/ ndf = 63.33 / 47 2χ PbA 9.84 ± 69.77 PbC 0.248 ± 1.712 Pb decay

E 1.745 ± 8.122

Energy [keV]

10 20 30 40 50 60 70 80 90 100

Counts / keV

0

200

400

600 ± ± ± ± ± ±