/ ndf = 54.51 / 47 2χ PbA 6.8±

113.6 PbC 0.0619 ± 0.9759 Pb decay

E 0.952 ± 9.469

Energy [keV]

10 20 30 40 50 60 70 80 90 100

Counts / keV

0

200

400

600

± ± ± ±