arXiv:0704.2971v1 [astro-ph] 23 Apr 2007

Mon. Not. R. Astron. Soc. 000, 000–000 (0000) Printed 23 November 2021 (MN L^ATEX style file v2.2)

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources

M.J. Page^1, I. Lehmann^2, Th. Boller^2, M.G. Watson^3, T. Dwelly^{1,4}, S. Hess^2, I. Matute^2, N.S. Loaring^{1,5}, S. Rosen^1, H. Ziaeepour^1, A. Schwope^6, G. Lamer^6, F.J. Carrera^7, J. Tedds^3, R. Della Ceca^8, P. Severgnini^8, R.G. McMahon^9, and W. Yuan^{9,10}

1Mullard Space Science Laboratory, University College London, Holmbury St Mary, Dorking, Surrey RH5 6NT, UK. 2Max-Planck-Institut für extraterrestrische Physik, Giessenbachstrasse, Postfach 1312, 85741 Garching, Germany. 3Department of Physics and Astronomy, University of Leicester, LE1 7RH, UK. 4School of Physics and Astronomy, University of Southampton, Southampton, SO17 1BJ, UK 5South African Astronomical Observatory, Observatory, 7935 Cape Town, South Africa 6Astrophysikalisches Institut Potsdam (AIP), An der Sternwarte 16, 14482 Potsdam, Germany. 7Instituto de Física de Cantabria (CSIC–Universidad de Cantabria), 39005 Santander, Spain. 8INAF-Osservatorio Astronomico di Brera, via Brera 28, I-20121 Milano, Italy. 9University of Cambridge, Institute of Astronomy, Madingley Road, Cambridge CB3 0HA, UK 10National Astronomical Observatory of China/Yunnan Observatory, Kunming, 650011, PO Box 110 Yunnan, China

ABSTRACT We present optical and X-ray data for a sample of serendipitous XMM-Newton sources that are selected to have 0.5-2 keV vs 2-4.5 keV X-ray hardness ratios which are harder than the X-ray background. The sources have 2-4.5 keV X-ray flux ≥ 10^{−14} erg cm^{−2} s^{−1}, and in this paper we examine a subsample of 42 optically bright (r < 21) sources; this subsample is 100 per cent spectroscopically identified. All but one of the optical counterparts are extragalactic, and we argue that the single exception, a Galactic M star, is probably a coincidental association rather than the correct identification of the X-ray source. The X-ray spectra of all the sources are consistent with heavily absorbed power laws (21.8 < log N_H < 23.4), and all of them, including the 2 sources with 2-10 keV intrinsic luminosities of < 10^{42} erg s^{−1}, appear to be absorbed AGN. The majority of the sources show only narrow emission lines in their optical spectra, implying that they are type- 2 AGN. Three sources have 2-10 keV luminosities of > 10^{44} erg s^{−1}, and two of these sources have optical spectra which are dominated by narrow emission lines, i.e. are type-2 QSOs. Only a small fraction of the sources (7/42) show broad optical emission lines, and all of these have N_H < 10^{23} cm^{−2}. This implies that ratios of X-ray absorption to optical/UV extinction equivalent to > 100× the Galactic gas-to-dust ratio are rare in AGN absorbers (at most a few percent of the population), and may be restricted to broad absorption-line QSOs. Seven objects appear to have an additional soft X-ray component in addition to the heavily absorbed power law; all seven are narrow emission line objects with z < 0.3 and 2-10 keV intrinsic luminosities < 10^{43} erg s^{−1}. We consider the implications of our results in the light of the AGN unified scheme. We find that the soft components in narrow-line objects are consistent with the unified scheme provided that > 4 per cent of broad-line AGN have ionised absorbers that attenuate their soft X-ray flux by > 50 per cent. In at least one of the X-ray absorbed, broad-line AGN in our sample the X-ray spectrum requires an ionised absorber, consistent with this picture.

Key words: X-rays: galaxies – galaxies: active

© 0000 RAS

2 Page, et al.

1 INTRODUCTION

Deep surveys with Chandra and XMM-Newton have now resolved the majority of the extragalactic Xray background (XRB) at < 5 keV into point sources (Alexander et al., 2003; Rosati et al., 2002; Worsley et al., 2004; Bauer et al., 2004). At the bright flux limits that were probed with Einstein and ROSAT surveys, the soft X-ray sky is dominated by broad-line AGN with soft X-ray spectra (Maccacaro et al., 1988; Mittaz et al., 1999). At faint fluxes, the bulk of the sources have hard X-ray spectra (Giacconi et al., 2001; Brandt et al., 2001), as required to produce the overall XRB spectral shape. XRB synthesis models predict that these faint, hard sources are intrinsically absorbed AGN (e.g. Setti & Woltjer, 1989; Comastri et al., 1995; Gilli, Salvati & Hasinger, 2001). These absorbed sources are likely to be the dominant AGN population: they are responsible for the majority of the XRB energy density and probably outnumber unabsorbed AGN by a factor of 4 or more (Fabian & Iwasawa, 1999), as is found in optical and X-ray studies of local AGN (Maiolino & Rieke, 1995; Risaliti, Maiolino & Salvati, 1999). Optical/infrared imaging and spectroscopy of the faint, hard-spectrum sources, while consistent with the absorbed AGN hypothesis, reveals a heterogeneous population. Many of these sources are narrow-line AGN (Seyfert 2s and QSO 2s), others show no emission lines whatsoever, while some are optically unobscured, broad line AGN (e.g. Mainieri et al., 2002; Barger et al., 2003; Szokoly et al., 2004; Page et al., 2006b). This variety suggests that there is a large range of gas-to-dust ratios within the absorbed population.

There are a variety of important issues regarding the absorbed population which remain to be addressed. First, the relationship between the optical spectroscopic characteristics and the level of X-ray absorption is not fully understood (e.g. Maiolino et al., 2001; Page, Mittaz & Carrera, 2001; Boller et al. , 2003; Barcons, Carrera & Ceballos, 2003; Caccianiga et al., 2004; Carrera, Page & Mittaz, 2004). Nor is it established whether the fraction of absorbed AGN depends on redshift and/or on luminosity: several recent studies suggest that the fraction of absorbed AGN decreases with luminosity and/or redshift (e.g. Cowie et al., 2003; Barger et al., 2003; Steffen et al., 2003; Ueda et al., 2003; La Franca et al., 2005), while other studies suggest that the absorbed fraction is independent of luminosity (e.g. Treister et al., 2004; Dwelly et al., 2005; Dwelly & Page, 2006; Tozzi et al., 2006). Indeed, this issue has been debated since at least the early 1980s (e.g. Lawrence & Elvis, 1982; Mushotzky, 1982; Maccacaro, Gioia & Stocke, 1984). Another particularly important question is whether the absorbed AGN population is wholly related to the unabsorbed population by AGN geometric unification schemes (Antonucci, 1993). Broad line AGN with significant X-ray absorption but little or no optical/UV obscuration (e.g. Barr et al., 1977; Elvis et al., 1994; Akiyama et al., 2000; Page, Mittaz & Carrera, 2001) have proven particularly challenging to fit within such schemes. Alternatively, parts of the absorbed population may be physically distinct from the unabsorbed population, as predicted by some evolutionary models (Sanders et al., 1988; Fabian, 1999; Franceschini, Braito & Fadda, 2002; Elvis, Marengo & Karovska, 2002; Page et al., 2004).

In this paper we present a sample of serendipitous XMM-Newton sources selected to have hard X-ray spectra in the 0.5-4.5 keV energy range. This sample is well suited for the study of the X-ray and optical characteristics of the X-ray/optically bright part of the X-ray absorbed AGN population. We describe the X-ray and optical selection of the sample in detail in Section 2, and in Sections 3 and 4 we describe the optical spectroscopic observations and the construction of the X-ray spectra. Our results are presented in Section 5 and their implications for the absorbed AGN population are discussed in Section 6. Throughout this paper we assume H0 = 70 km s^{−1} Mpc^{−1}, Ωm = 0.3, and ΩΛ = 0.7. We define a power law spectrum such that dN/dE = AE^{−Γ} where N is the number of photons, E is photon energy, Γ is the photon index and A is the normalisation.

2 SAMPLE SELECTION

Thanks to XMM-Newton’s exceptional throughput and large field of view (30^′ diameter), a serendipitous XMM- Newton catalogue is the obvious resource with which to find bright examples of the absorbed AGN population. Our serendipitous catalogue was constructed by concatenating the source lists from 100 pipeline processed XMM- Newton fields. This catalogue preceded the public release of the 1XMM catalogue, which is about 6 times larger, (Watson et al., 2003) but contains similar information about each source. The targets of the XMM-Newton observations were excluded from the catalogue. Hardspectrum sources are heavily outnumbered at bright fluxes by soft-spectrum, unabsorbed AGN, even in the 2-10 keV band. Therefore we have selected our sample from the catalogue using the 2-4.5 keV vs 0.5-2 keV hardness ratio. We refer to this ratio as “HR2” to follow the convention used in the 1XMM catalogue. HR2 is defined as HR2 = CR2−4.5 − CR0.5−2 CR2−4.5 + CR0.5−2 (1) where CR2−4.5 is the vignetting-corrected countrate in the 2-4.5 keV range and CR0.5−2 is the vignetting-corrected countrate in the 0.5-2 keV range. HR2 is calculated independently for each of the 3 EPIC cameras. The specific criterion used to select the sample is: HR2 − σHR2 > −0.3 (2) where σHR2 is the 68% uncertainty on HR2. The HR2 threshold of −0.3 corresponds approximately to the slope of the XRB in the same energy range, so that only objects with spectra harder than the XRB will be picked up with this criterion. This range of HR2 also corresponds to the most heavily absorbed AGN typically found in XMM-Newton surveys (Caccianiga et al., 2004; Della Ceca et al., 2004), the numbers and redshifts of which place significant constraints on XRB synthesis models (Dwelly et al., 2005). For inclusion in the sample, we require a source to have a detection likelihood (DET ML

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 3

Figure 1. HR2 and HR3 hardness ratio distribution of the optically bright sources (large dots) and optically-faint / blankfield sources (small dots) from the hard spectrum sample. The underlying greyscale and contours show the pn-camera hardness ratio distribution of the entire high galactic latitude (| b |> 20^∘) 1XMM catalogue, and have a logarithmic scaling (Watson et al., 2003).

in 1XMM) > 7.5^1 in the 2-4.5 keV band, 2-4.5 keV flux > 10^{−14} erg cm^{−2} s^{−1} Galactic NH < 5 × 10^{20}cm^{−2}, |b| > 30 degrees, and satisfy equation 2 in at least one of the three EPIC cameras. The DET ML threshold of 7.5 corresponds to a probability of being a background fluctuation of 5 × 10^{−4}, and a spurious source fraction of < 1% (Watson et al., 2003). From a total of 9340 sources with DET ML > 7.5 found in the 100 XMM-Newton fields used here, we obtained a sample of 136 sources which meet the selection criteria for our hard spectrum sample.

The sources were categorised according to optical magnitude to facilitate our optical identification programme. Those sources with counterparts on SuperCOS- MOS digitisations of the Palomar or UK Schmidt Telescope sky survey plates within 6^{′′} of the X-ray position will be referred to as the optically bright sample; this amounts to 73 sources, and provides the target list for our spectroscopic identification programme on 4m telescopes. Those sources without sky survey counterparts^2 but which have counterparts in deeper imaging form the target list for our spectroscopic identification programme on 8-10m telescopes and are considered the optically-faint sample. Our identification programme for the optically faint sample is ongoing. The final category of sources (“blank-field

1 A coding error in the task emldetect led to overestimated values for DET ML prior to SAS version 6.0. The values of DET ML given in this paper have been corrected for this problem.

2 We take the the sky survey plate limit to be r ∼ 21, and consider sources with r > 21 as part of the optically-faint sample even if they are detected on the sky survey plates.

Figure 2. 2-4.5 keV X-ray flux vs optical r-band magnitude for the hard-spectrum sources. The solid line corresponds to the ratio f_X /f_R = 1 and the dashed lines indicate the ±1 dex interval, where f_X /f_R is the ratio of X-ray to optical flux as defined in McHardy et al. (2003). The 2 - 4.5 keV fluxes (f_{2−4.5} ) were determined from the 2-4.5 keV count rates, assuming a photon index Γ = 1.7.

sources”) are those for which no optical counterpart is found to r ∼ 23. Discussion of the optically faint and blank-field samples is deferred to a future paper pending the results of the 8-10m spectroscopic campaign.

The hardness ratios, HR2 and HR3, for the full sample of hard spectrum sources are shown in Fig. 1, where HR3 is the 4.5-7.5 keV vs 2-4.5 keV hardness ratio, defined as HR3 = CR4.5−7.5 − CR2−4.5 CR4.5−7.5 + CR2−4.5 (3) The optically bright sources are shown as large dots, while the optically faint and blank-field sources are shown as small dots. The optically faint and optically bright parts of the sample have similar hardness ratio distributions: the two distributions are indistinguishable at the 90 per cent confidence level according to the 2-dimensional Kolmogorov-Smirnov test (Fasano & Franceschini, 1987). The underlying greyscale and contours show the hardness ratio distribution for the | b |> 20^∘ 1XMM catalogue (Watson et al., 2003). The peak in the underlying distribution at (−0.6,−0.5) corresponds to the typical spectra of unabsorbed, broad-line AGN. While such sources dominate the 1XMM catalogue, (and all medium-depth, fluxlimited samples of serendipitous XMM-Newton sources) the distribution shows a significant tail stretching to larger values of HR2. The hard spectrum sample described in this paper follows the underlying distribution of 1XMM sources well for HR2 >−0.2, and so is ideal for the study of this hard-spectrum tail of the population.

The optical magnitudes and X-ray fluxes of the hard spectrum sources are shown in Fig. 2, and in this figure we also show the interval | log_{10}(fX /fR) |< 1, where fX and fR are X-ray flux and optical flux respectively, as defined by McHardy et al. (2003)^3. The major-

3 The relationship f_X = f_R as defined by (McHardy et al., 2003) translates to r = 20.175 − log f_{2−4.5} where f_{2−4.5} is the 2 - 4.5 keV flux in units of

© 0000 RAS, MNRAS 000, 000–000

4 Page, et al.

ity of hard-spectrum sources lie within this interval, as do most of the X-ray selected population at this flux level (Stocke et al., 1991).

3 OPTICAL SPECTROSCOPIC

OBSERVATIONS

Optical spectra were obtained in two observing runs. The first run took place on the nights of 27th and 28th January 2003 at the William Herschel Telescope on La Palma. Observing conditions were variable, but most of the data were taken in conditions of good seeing (∼ 1^{′′}) and sky transparency. Observations were made with the ISIS dual arm spectrograph using a 1.5^{′′} slit oriented at the parallactic angle, and employing the 5400 Å dichroic. On the blue arm we used the R300B grating, covering the wavelength range from 3000 – 5700 Å at 4.9 Å resolution (measured from arc lines taken through the slit) and on the red arm we used the R158R grating, covering the wavelength range 5000 – 10000 Å at 10.1 Å resolution. Spectra of CuNe and CuAr arclamps were used to calibrate the wavelength scale. Flux calibration, and approximate correction for the telluric absorption bands at ∼ 6900 and ∼ 7600 Å were achieved through observations of G191- B2B and BD+33 2642. Data were reduced using standard IRAF routines. The reduced, flux calibrated spectra from the red and blue arms were then merged to form a single spectrum for each target.

The second observing run took place at the New Technology Telescope (NTT) at La Silla on the nights of the 2nd and 3rd May 2003 in conditions of variable seeing and sky transparency. Observations were made using the EMMI spectrograph using a 1^{′′} slit at the parallactic angle and grism #3, providing 8 Å resolution and a wavelength range of 3800–9000 Å. Spectra of He and Ar arclamps were used to calibrate the wavelength scale. Observations of the spectrophotometric standards LTT4364 and LTT2415 were used for relative flux calibration.

In total, spectra of the optical counterparts to 42 hard-spectrum sources were observed. The spectroscopic completeness is 100% for the observed sample, i.e. an adequate spectrum yielding a reliable redshift was obtained for every optical counterpart that was observed. Apart from the selection of counterparts from sky survey plates, we did not bias the spectroscopic observations to bright sources. To demonstrate this, Fig. 4 compares the optical magnitude distributions for the optically bright sources which were and were not observed spectroscopically; the two distributions are indistinguishable according to the Kolmogorov-Smirnov test, which gives the probability that they were both drawn from the same distribution as 46 per cent. Hence our spectroscopically identified sources are a representative and statistically-complete sample of the optically bright (r< 21), hard spectrum population.

10^{−14} ergs cm^{−2} s^{−1}, assuming an X-ray photon index Γ = 1.7.

Figure 4. Magnitude distributions for sources with r<21 which were (upper panel) and were not (lower panel) observed during our optical spectroscopic observations.

4 CONSTRUCTION OF X-RAY SPECTRA

We extracted X-ray spectra for every source using the available XMM-Newton EPIC data. For sources which are present in more than one XMM-Newton observation in the public archive, we have used all the available data to obtain the highest possible signal to noise ratio. Table 1 gives the XMM-Newton observations used to construct the Xray spectrum of each source. The EPIC data were reduced using the Science Analysis System (SAS) verson 5.4. The XMM-Newton point spread function changes with off-axis angle. Therefore source spectra were extracted from elliptical source regions with sizes and orientations depending on the fluxes and off-axis angles of the sources. Typically, these regions have major axes of ∼ 18^{′′} and minor axes of ∼ 10^{′′} . Background spectra were extracted from annular regions, of 2.5^′ outer radius, centred on the source, and with all significant X-ray sources excised. Response matrices and the appropriate effective area files were computed using the SAS tasks RMFGEN and ARF- GEN respectively. For each source the EPIC spectra were combined to form a single spectrum using the method of Page, Davis & Salvi (2003). Source spectra were grouped using the HEASOFT tool GRPPHA to ensure the minimum number of counts per bin given in Table 3 (usually 20) before fitting.

5 RESULTS

5.1 Optical spectra

The optical spectra are shown in Fig. 3, and the identifications, redshifts and emission line characteris-

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 5

Figure 3. Optical spectra of hard-spectrum serendipitous sources.

6 Page, et al.

Figure 3 continued

tics are given in Table 2. The distribution of offsets between the X-ray sources and optical counterparts is similar to those found in other XMM-Newton surveys of similar depth (e.g. Barcons et al., 2002; Fiore et al, 2003), with 90 per cent of optical counterparts lying within 3 arcseconds of the X-ray source. Note that two of the sources, XMM J122656.53+013125.2 and XMM J134656.75+580316.65 are also members of the XMM-Newton Bright Serendipitous Survey and are also reported in Della Ceca et al. (2004), while one of the

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 7

Figure 3 continued

sources, XMM J021939.22−051133.7, is also a member of the XMM-Newton Medium Sensitivity Survey and is also reported in Barcons et al. (2007). We have split the objects into four categories. Objects which have any permitted emission lines with measured FWHM^4 > 1000 km s^{−1}

4 The FWHM have not been corrected for the instrumental contribution, which is up to 600 km s^{−1} at the blue end of EMMI.

8 Page, et al.

Figure 3 continued

have been classified as broad-line active galactic nuclei (BLAGN); this class includes QSOs and type 1 Seyferts. Galaxies which only show emission lines with FWHM < 1000 km s^{−1} have been classified as narrow emission line galaxies (NELGs). Galaxies in which we do not detect any emission lines have been classified simply as ‘galaxies’. Finally, one object has the spectrum of a Galactic star.

As can be seen in Fig. 3 and Table 2, the sources all have z < 0.8, and majority (31/42) of the sources are classified as NELGs. In all the NELGs we observe at least one

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 9

Figure 3 continued

Table 1. XMM-Newton observations used to construct the X-ray spectra.

Source — XMM-Newton observation IDs —

XMM J005601.36−012407.4 0012440101 XMM J005609.41−012641.7 0012440101 XMM J021908.37−044731.4 0112370401 0112371501 0112370301 XMM J021939.22−051133.7 0112370301 XMM J022322.12−045738.1 0109520501 XMM J080625.35+244326.0 0094530401 XMM J083139.11+524206.2 0092800201 0092800101 XMM J090524.00+621114.2 0110661701 0110660201 XMM J094239.79+465005.3 0106460101 XMM J094454.24−083953.6 0017540101 XMM J094527.16−083309.4 0017540101 XMM J095231.84−015016.1 0065790101 XMM J095539.24+411727.3 0111290201 XMM J104441.90−012655.3 0125300101 XMM J104444.50−013313.5 0125300101 XMM J105014.58+325041.5 0055990201 XMM J105743.59−033402.4 0094800101 XMM J111825.42+073448.3 0082340101 XMM J115233.75+371156.3 0112551401 XMM J121312.04+024929.8 0081340801 XMM J122656.53+013125.2 0110990201 XMM J125701.68+281230.2 0124710701 0124712101 XMM J130129.08+274037.1 0124710801 XMM J130458.98+175451.8 0017940101 XMM J130529.89−102141.5 0032141201 XMM J133026.09+241356.7 0100240101 0100240201 XMM J133623.04+241738.6 0096010101 XMM J133913.92−314421.9 0035940301 XMM J134656.75+580316.5 0112250201 XMM J140057.10−110120.6 0109910101 XMM J140145.11+025334.6 0098010101 XMM J140149.53−111647.8 0109910101 XMM J141634.78+113329.2 0112250301 0112251301 XMM J145048.99+191431.2 0056030101 XMM J150339.60+101605.6 0112910101 0070740101 0070740301 XMM J150558.42+014104.2 0021540101 XMM J151650.30+070907.3 0109920301 0109920101 XMM J152146.64+073113.9 0109930101 XMM J152254.63+074534.5 0109930101 XMM J161646.54+122015.1 0103460901 0103460801 XMM J161736.21+122901.5 0103461001 0103460901 XMM J161818.95+124110.3 0103461001

10 Page, et al.

Table 2. The X-ray sources and optical counterparts. X-ray fluxes are for the 2-4.5 keV band, in units of 10^{−14} erg cm^{−2} s^{−1}. The column labelled ‘r’ gives the r magnitude from our Isaac Newton Telescope Wide Field Camera images, except for those sources marked with an ‘∗’, in which case the magnitude is UK Schmidt R (for southern fields) or POSS-II R (for northern fields). The ‘cam’ column gives the EPIC camera from which the source was selected. The column labelled ‘o − x’ gives the offset between the X-ray and optical positions in arcseconds.

Source Flux HR2 cam Galactic N_H optical position (J2000) o-x r type z (2-4.5) (10^{20} cm^{−2}) RA dec (^{′′})

XMM J005601.36−012407.4 2.4 −0.04 ± 0.10 PN 3.24 00 56 01.46 −01 24 05.0 2.8 21.0^∗ NELG 0.463 XMM J005609.41−012641.7 2.4 0.58 ± 0.15 PN 3.29 00 56 09.56 −01 26 41.7 2.2 17.7^∗ NELG 0.148 XMM J021908.37−044731.4 5.4 0.04 ± 0.10 M2 2.55 02 19 08.38 −04 47 30.7 0.7 19.7 NELG 0.279 XMM J021939.22−051133.7 1.8 0.26 ± 0.15 PN 2.59 02 19 39.08 −05 11 33.4 2.1 17.7 NELG 0.151 XMM J022322.12−045738.1 1.9 0.60 ± 0.10 PN 2.63 02 23 21.95 −04 57 38.9 2.7 20.7^∗ NELG 0.780 XMM J080625.35+244326.0 5.8 0.13 ± 0.19 M1 3.94 08 06 25.33 +24 43 24.1 1.9 20.0 BLAGN 0.608 XMM J083139.11+524206.2 1.2 0.02 ± 0.14 PN 3.84 08 31 39.08 +52 42 05.8 0.5 17.4 NELG 0.059 XMM J090524.00+621114.2 4.0 0.43 ± 0.16 M2 4.47 09 05 23.75 +62 11 09.3 5.2 18.2^∗ NELG 0.175 XMM J094239.79+465005.3 3.5 0.24 ± 0.11 M1 1.25 09 42 39.99 +46 50 04.9 2.1 20.3 NELG 0.284 XMM J094454.24−083953.6 3.3 0.18 ± 0.16 M1 3.60 09 44 54.02 −08 39 52.8 3.4 20.3^∗ NELG 0.362 XMM J094527.16−083309.4 1.7 0.49 ± 0.21 PN 3.58 09 45 27.18 −08 33 08.1 1.3 18.7^∗ NELG 0.369 XMM J095231.84−015016.1 5.2 −0.08 ± 0.10 PN 3.96 09 52 31.79 −01 50 13.9 2.3 18.7^∗ galaxy 0.316 XMM J095539.24+411727.3 2.8 0.06 ± 0.21 PN 1.16 09 55 39.38 +41 17 29.6 2.8 19.1^∗ NELG 0.249 XMM J104441.90−012655.3 1.9 0.05 ± 0.07 PN 4.18 10 44 41.88 −01 26 56.2 1.0 19.1^∗ NELG 0.160 XMM J104444.50−013313.5 2.0 −0.01 ± 0.09 PN 4.19 10 44 44.48 −01 33 10.6 2.9 18.3^∗ M star 0.000 XMM J105014.58+325041.5 1.8 −0.13 ± 0.14 PN 2.00 10 50 14.58 +32 50 42.6 1.1 20.0 NELG 0.309 XMM J105743.59−033402.4 2.0 0.18 ± 0.14 PN 3.59 10 57 43.68 −03 34 02.0 1.4 19.0 BLAGN 0.567 XMM J111825.42+073448.3 1.3 0.22 ± 0.11 PN 3.75 11 18 25.25 +07 34 48.8 2.6 20.3 BLAGN 0.466 XMM J115233.75+371156.3 9.2 0.07 ± 0.13 M1 1.88 11 52 33.80 +37 11 56.5 0.6 19.1^∗ NELG 0.411 XMM J121312.04+024929.8 2.1 0.42 ± 0.34 PN 1.79 12 13 12.17 +02 49 25.9 4.4 18.8^∗ NELG 0.216 XMM J122656.53+013125.2 7.5 −0.23 ± 0.06 PN 1.84 12 26 56.46 +01 31 24.6 1.2 19.6^∗ BLAGN 0.732 XMM J125701.68+281230.2 3.3 0.12 ± 0.12 PN 0.91 12 57 01.72 +28 12 30.2 0.5 18.8^∗ BLAGN 0.305 XMM J130129.08+274037.1 2.4 0.38 ± 0.15 M1 0.94 13 01 29.17 +27 40 37.3 1.2 19.7^∗ NELG 0.462 XMM J130458.98+175451.8 2.8 0.66 ± 0.18 M1 2.15 13 04 59.01 +17 54 54.4 2.6 16.3 NELG 0.034 XMM J130529.89−102141.5 1.4 0.39 ± 0.14 PN 3.32 13 05 29.89 −10 21 42.3 0.8 19.3^∗ NELG 0.366 XMM J133026.09+241356.7 2.5 0.04 ± 0.08 PN 1.16 13 30 26.05 +24 13 56.1 0.8 18.7^∗ NELG 0.166 XMM J133623.04+241738.6 4.1 0.12 ± 0.12 M2 1.17 13 36 22.90 +24 17 36.5 2.8 20.1 NELG 0.341 XMM J133913.92−314421.9 2.3 0.01 ± 0.12 M1 3.85 13 39 13.94 −31 44 22.4 0.6 19.4^∗ galaxy 0.378 XMM J134656.75+580316.5 3.4 0.47 ± 0.10 PN 1.27 13 46 56.75 +58 03 15.7 0.8 20.0 galaxy 0.373 XMM J140057.10−110120.6 2.9 −0.12 ± 0.11 M2 4.12 14 00 57.09 −11 01 21.2 0.6 18.0^∗ BLAGN 0.257 XMM J140145.11+025334.6 2.2 −0.21 ± 0.09 PN 2.33 14 01 45.02 +02 53 33.1 2.0 18.0^∗ NELG 0.242 XMM J140149.53−111647.8 1.9 0.20 ± 0.12 PN 4.54 14 01 49.52 −11 16 48.4 0.6 19.8 NELG 0.248 XMM J141634.78+113329.2 3.9 0.08 ± 0.11 PN 1.82 14 16 34.82 +11 33 31.5 2.4 20.8 NELG 0.519 XMM J145048.99+191431.2 3.9 0.02 ± 0.10 M2 2.48 14 50 48.98 +19 14 30.9 0.3 18.1^∗ BLAGN 0.774 XMM J150339.60+101605.6 9.7 0.63 ± 0.10 M1 2.32 15 03 39.50 +10 16 03.0 3.0 16.9^∗ NELG 0.088 XMM J150558.42+014104.2 3.4 0.16 ± 0.08 PN 4.26 15 05 58.38 +01 41 04.3 0.6 19.2 NELG 0.237 XMM J151650.30+070907.3 3.1 0.07 ± 0.14 M1 2.68 15 16 50.37 +07 09 04.3 3.2 20.5^∗ NELG 0.674 XMM J152146.64+073113.9 4.2 −0.16 ± 0.06 PN 3.05 15 21 46.68 +07 31 13.4 0.8 19.9 NELG 0.429 XMM J152254.63+074534.5 1.1 −0.06 ± 0.20 PN 3.12 15 22 54.63 +07 45 33.4 1.1 19.4^∗ NELG 0.400 XMM J161646.54+122015.1 2.3 −0.09 ± 0.14 PN 4.57 16 16 46.37 +12 20 17.6 3.5 19.1^∗ NELG 0.256 XMM J161736.21+122901.5 3.3 0.09 ± 0.18 PN 4.59 16 17 36.25 +12 29 03.3 1.9 15.7^∗ NELG 0.030 XMM J161818.95+124110.3 3.3 0.43 ± 0.28 M2 4.56 16 18 19.00 +12 41 11.6 1.5 18.3^∗ NELG 0.191

of Hα, [O III] 4954 Å/5007 Å or [O II] 3727 Å. The three objects classified as galaxies have 0.3 < z < 0.4, similar to the mean redshift for the NELGs, ⟨z⟩ = 0.29 ± 0.03, so their galaxy classification is not due to these emission lines being redshifted outside the observed spectral window. The 7 BLAGN, however, have a higher mean redshift than either the NELGs or galaxies, ⟨z⟩ = 0.53 ± 0.08. More than half of the BLAGN are identified by a broad Mg II 2798 Å line.

Two sources (XMM J122656.53+013125.2 and XMM J140057.10−110120.6) have emission lines with 1000 km s < FWHM < 2000 km s^{−1}, and therefore might conceivably be narrow line

Seyfert 1 galaxies (Osterbrock & Pogge, 1985). In XMM J122656.53+013125.2 the Mg II line has a measured FWHM of 1600 km s^{−1}, and the other lines all have FWHM < 1000 km s^{−1}. However the large ratio of [O III]/Hβ rules out a narrow-line Seyfert 1 galaxy (Shuder & Osterbrock, 1981), and suggests instead that the broad line region is heavily reddened. The Mg II profile could be a composite of emission from the narrow line region and a reddened line from the broad line region. For XMM J140057.10−110120.6 only one emission line is detected (Hα) with a measured FWHM of 1900 km s^{−1}. The red, galaxy-dominated continuum leads us to suspect that the nucleus and broad line region are also reddened

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 11

in this object, and that the Hα line profile is likely to be a composite of emission from the narrow line region and a reddened broad line.

5.2 Basic X-ray spectral modeling

The X-ray spectra are shown in Fig. 6. As a starting point for the spectral modeling we considered an absorbed power law model, corresponding to an AGN viewed through a screen of cold material. For each object we included a zero-redshift absorber with NH fixed at the Galactic value found from 21 cm observations (Dickey & Lockman, 1990) and a cold absorber at the redshift of the source with NH as a free parameter in the fit. In fits of this type, particularly in low–moderate signal/noise data, the power-law photon index Γ and absorbing column density NH are somewhat degenerate, and this can lead to large, highly coupled uncertainties on both parameters. Therefore we began our spectral fitting with Γ fixed at a value of 1.9, which is the mean slope found for unobscured BLAGN in XMM-Newton surveys (Mainieri et al., 2002; Piconcelli et al., 2002; Caccianiga et al., 2004; Mateos et al., 2005a; Page et al., 2006b).

The results of these fits are given in Table 3; the uncertainties listed in Table 3 and all subsequent tables are 95% for one interesting parameter (Δχ^2 = 4). We consider a null hypothesis probability of 1% to be an appropriate threshold for rejection of the spectral model, because at this level, and for our sample size, we expect less than one rejection by chance if the form of the model is correct. Of the 42 sources, 33 are therefore acceptably fitted with this model, while 9 objects (∼ 20%) are not acceptably fitted. In 7 of the 9 cases, the poor χ^2 is due to an excess of flux in the lowest energy channels with respect to the model (see Fig. 6).

5.3 Modelling the 9 sources with complex X-ray spectra

We now examine in more detail the X-ray spectra of the 9 sources which were not well fitted with a Γ = 1.9 power law and neutral absorption. Before considering spectral models with an additional soft X-ray component, we investigate the possibility that the poor χ^2 could be a consequence of our decision to fix Γ = 1.9 in the power law component. There is certainly a range of photon indices in the unabsorbed AGN population (Mateos et al., 2005a,b; Page et al., 2006b), and the fit with fixed Γ could result in significant residuals for AGN which are outliers in this distribution. Therefore, for the nine objects which had unacceptable χ^2/ν, we refit the spectra, this time allowing the photon index of the power law to vary as a fit parameter. The results of these fits are shown in Table 4. Four of the objects are acceptably fitted with this model, but only one of these, XMM J122656.53+013125.2, has a value of Γ consistent with a ‘normal’ AGN spectrum. The other 3 objects (XMM J161736.21+122901.5, XMM J094239.79+465005.3, and XMM J080625.35+244326.0) for which this fit yields a reasonable χ^2/ν have best fit photon indices which are exceedingly hard, Γ < 1.2. Such photon indices are well outside the range of photon indices normally observed in unabsorbed AGN (> 3.5σ outliers from the distribution, Mateos et al., 2005a), and therefore we consider that the variation in AGN photon indices only provides a plausible explanation for the poor fit of the absorbed Γ = 1.9 power law model to the X-ray spectrum of XMM J122656.53+013125.2.

For the 9 objects not well fitted in Section 5.2, we now consider a model of photoelectric absorption in which the absorber is ionised, rather than cold, as ionised absorption is often observed in nearby Seyfert 1 galaxies (e.g. Reynolds, 1997; George et al., 1998; Blustin et al., 2005). For this we use the ‘absori’ model in XSPEC, in which the ionization state of the absorber is defined by the ionization parameter ξ = L/nr^2 , where L is the ionising luminosity of the source, n is the number density of the absorber and r is the distance of the absorber from the ionising radiation. The photon index of the power law was fixed at Γ = 1.9, and the temperature of the absorber was fixed at 3×10^4K (the fits are not sensitive to this parameter). The results are given in Table 5. This model produces acceptable χ^2/ν for 4/9 of the sources, but does not give acceptable fits for the other 5 objects.

Next we considered two different models which contain an additional component which is bright at the soft X-ray end of the spectrum. To minimise the number of free parameters in the fit, we maintain a fixed Γ = 1.9 for the primary power law component in these fits.

In the first model, we include a second power law with Γ = 1.9, but which is not attenuated by the column of cold gas intrinsic to the object, and represents a component of the primary emission which is scattered into our line of sight, bypassing the absorber. The photon indices of both power laws were frozen at a value of 1.9 in this model. Although such a model is lacking in experimental verification from observations of nearby AGN, it has a long heritage (e.g. Holt et al., 1980; Turner et al., 1997; Franceschini et al., 2003; Caccianiga et al., 2004), and its functional form provides a simple and convenient parameterisation of the relative contributions of the primary, absorbed component and the component which provides the excess flux at soft energies. The results of fitting this model are listed in Table 6. All but 2 objects are fitted acceptably using this model. We have also used this model to determine 95% upper limits for the contribution of any soft component in the sources which are acceptably fitted with a simple absorbed power law model, by increasing the contribution of the unabsorbed power law until Δχ^2=4 with respect to the model without the unabsorbed power law; these upper limits are included in Table 3.

In the second model, we include an opticallythin thermal plasma component (‘mekal’ in XSPEC) instead of an additional power law. We do not include any attenuation of this component by the intrinsic absorber, because it is intended to represent a soft X-ray line emitting plasma which lies outside the central, obscured region of the AGN. Such a component of line emitting plasma has long been seen in Seyfert 2s (e.g. Marshall et al., 1993; Ueno et al., 1994; Turner et al., 1997; Ogle et al., 2000). Observations with the gratings onboard XMM-Newton and Chandra show that the gas is photoionised (e.g. Sako et al., 2000; Kinkhabwala et al., 2002; Brinkman et al., 2002) rather

12 Page, et al.

Table 3. Absorbed power law fits to the XMM-Newton spectra with fixed photon index Γ = 1.9. The column labelled ‘Counts min/bin’ indicates the minimum number of counts per bin used when constructing the spectrum. A is the power law normalisation in units of 10^{−5} photons cm^{−2} s^{−1} keV^{−1}. The ‘Prob’ column gives the null hypothesis probability corresponding to χ^2/ν. Confidence limits are given at 95% for one interesting parameter (Δχ^2 = 4); confidence limits that are truncated by the allowed fit range of the parameter, rather than by Δχ^2 = 4 are labelled with ‘∗’. The final column gives the 95% upper limit on the ratio of a second, unabsorbed power law to the primary absorbed power law for those sources which are well fitted by the single absorbed power law model, as described in Section 5.3.

Source Counts A log N_H χ^2/ν Prob 95% upper limit min/bin (cm^{−2}) A_2/A_1

XMM J005601.36−012407.4 30 1.7^{+0.4}_{−0.3} 22.1^{+0.2}_{−0.2} 13 / 13 0.43 0.12 XMM J005609.41−012641.7 20 2.3^{+0.9}_{−0.8} 22.7^{+0.2}_{−0.2} 5 / 9 0.85 0.05 XMM J021908.37−044731.4 20 2.2^{+0.4}_{−0.4} 22.0^{+0.1}_{−0.2} 38 / 14 6.1 × 10^{−4} – XMM J021939.22−051133.7 20 3.7^{+1.1}_{−1.0} 22.8^{+0.2}_{−0.2} 23 / 9 7.1 × 10^{−3} – XMM J022322.12−045738.1 20 1.9^{+0.6}_{−0.5} 23.1^{+0.2}_{−0.2} 4 / 4 0.39 0.02 XMM J080625.35+244326.0 15 1.4^{+0.8}_{−0.8} 21.9^{+0.5}_{−21.9∗} 16 / 5 7.2 × 10^{−3} – XMM J083139.11+524206.2 20 7.0^{+1.3}_{−1.1} 23.3^{+0.1}_{−0.1} 149 / 38 6.7 × 10^{−15} – XMM J090524.00+621114.2 5 1.3^{+1.2}_{−0.8} 22.3^{+0.6}_{−0.5} 7 / 5 0.25 0.16 XMM J094239.79+465005.3 20 1.2^{+0.4}_{−0.4} 22.3^{+0.3}_{−0.3} 27 / 10 2.3 × 10^{−3} – XMM J094454.24−083953.6 10 1.3^{+0.7}_{−0.6} 22.3^{+0.4}_{−0.4} 2 / 2 0.33 0.22 XMM J094527.16−083309.4 10 4.8^{+6.6}_{−3.4} 23.3^{+0.4}_{−0.7} 3 / 2 0.23 0.07 XMM J095231.84−015016.1 20 2.2^{+0.7}_{−0.6} 21.9^{+0.2}_{−0.3} 1 / 3 0.76 0.26 XMM J095539.24+411727.3 10 3.6^{+3.7}_{−2.0} 22.8^{+0.5}_{−0.4} 3 / 4 0.56 0.08 XMM J104441.90−012655.3 20 1.7^{+0.3}_{−0.3} 22.3^{+0.1}_{−0.1} 17 / 14 0.28 0.03 XMM J104444.50−013313.5 20 2.2^{+0.6}_{−0.5} 22.0^{+0.2}_{−0.2} 18 / 13 0.17 0.13 XMM J105014.58+325041.5 20 1.7^{+0.5}_{−0.5} 22.3^{+0.2}_{−0.2} 1 / 4 0.95 0.07 XMM J105743.59−033402.4 20 1.1^{+0.6}_{−0.4} 22.5^{+0.3}_{−0.3} 12 / 4 1.6 × 10^{−2} 0.44 XMM J111825.42+073448.3 20 1.2^{+0.4}_{−0.3} 22.6^{+0.2}_{−0.2} 22 / 13 6.0 × 10^{−2} 0.14 XMM J115233.75+371156.3 5 5.1^{+4.4}_{−3.2} 22.4^{+0.5}_{−0.5} 1 / 2 0.75 0.27 XMM J121312.04+024929.8 20 1.3^{+0.7}_{−0.5} 22.5^{+0.3}_{−0.3} 10 / 4 3.7 × 10^{−2} 0.16 XMM J122656.53+013125.2 20 5.8^{+0.9}_{−0.8} 22.4^{+0.1}_{−0.1} 37 / 17 5.6 × 10^{−3} – XMM J125701.68+281230.2 20 3.4^{+1.0}_{−0.9} 22.8^{+0.2}_{−0.2} 17 / 11 0.11 0.05 XMM J130129.08+274037.1 20 1.0^{+0.4}_{−0.3} 22.7^{+0.2}_{−0.2} 5 / 5 0.44 0.06 XMM J130458.98+175451.8 20 2.1^{+0.8}_{−0.7} 22.6^{+0.2}_{−0.2} 12 / 9 0.21 0.03 XMM J130529.89−102141.5 5 1.1^{+1.0}_{−0.6} 22.7^{+0.5}_{−0.4} 3 / 5 0.69 0.08 XMM J133026.09+241356.7 20 2.8^{+0.5}_{−0.4} 22.5^{+0.1}_{−0.1} 117 / 34 5.6 × 10^{−11} – XMM J133623.04+241738.6 15 3.6^{+2.1}_{−1.8} 22.4^{+0.3}_{−0.5} 7 / 3 8.4 × 10^{−2} 0.24 XMM J133913.92−314421.9 20 1.6^{+0.4}_{−0.4} 22.3^{+0.2}_{−0.2} 10 / 9 0.38 0.13 XMM J134656.75+580316.5 20 6.1^{+1.9}_{−1.5} 22.9^{+0.2}_{−0.2} 20 / 11 4.5 × 10^{−2} 0.02 XMM J140057.10−110120.6 20 1.8^{+0.5}_{−0.5} 22.4^{+0.2}_{−0.2} 11 / 11 0.46 0.05 XMM J140145.11+025334.6 10 1.4^{+0.7}_{−0.6} 22.0^{+0.4}_{−0.5} 3 / 6 0.81 0.38 XMM J140149.53−111647.8 20 1.3^{+0.3}_{−0.3} 22.4^{+0.2}_{−0.2} 12 / 13 0.51 0.07 XMM J141634.78+113329.2 20 2.1^{+0.4}_{−0.4} 22.3^{+0.1}_{−0.1} 23 / 17 0.16 0.18 XMM J145048.99+191431.2 20 1.4^{+0.3}_{−0.3} 22.6^{+0.1}_{−0.1} 7 / 10 0.72 0.11 XMM J150339.60+101605.6 20 7.1^{+2.1}_{−1.7} 22.8^{+0.2}_{−0.1} 47 / 13 1.0 × 10^{−5} – XMM J150558.42+014104.2 25 3.1^{+1.0}_{−0.9} 22.4^{+0.2}_{−0.2} 7 / 5 0.23 0.06 XMM J151650.30+070907.3 20 0.8^{+0.3}_{−0.2} 22.3^{+0.3}_{−0.3} 11 / 12 0.53 0.22 XMM J152146.64+073113.9 20 3.9^{+0.6}_{−0.6} 22.3^{+0.1}_{−0.1} 29 / 29 0.48 0.07 XMM J152254.63+074534.5 20 0.8^{+0.9}_{−0.5} 22.8^{+0.6}_{−0.5} 4 / 2 0.15 0.05 XMM J161646.54+122015.1 20 1.9^{+0.4}_{−0.4} 22.2^{+0.2}_{−0.1} 12 / 10 0.32 0.17 XMM J161736.21+122901.5 20 1.7^{+0.7}_{−0.5} 22.0^{+0.3}_{−0.3} 29 / 10 1.3 × 10^{−3} – XMM J161818.95+124110.3 20 3.5^{+1.8}_{−1.5} 22.8^{+0.3}_{−0.3} 4 / 2 0.12 0.15

than collisionally ionised (as in the mekal model). However, the two cases are indistinguishable at the resolution and signal to noise ratio of our data. The fit results are given in Table 7; this model is quite successful, in that it provides an acceptable fit for 6 of the 9 sources.

6 DISCUSSION

6.1 Optical identifications of the hard spectrum sources

The hardness ratio selection has produced a sample with considerably different optical properties to the general Xray population at S0.5−4.5 > 10^{−14} erg cm^{−2} s^{−1}. Of our sample of 42 objects, 31 are identified as NELGs,

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 13

Table 4. Absorbed power law fits to the XMM-Newton spectra with photon index Γ free to vary. A is the power law normalisation in units of 10^{−5} photons cm^{−2} s^{−1} keV^{−1}. The ‘Prob’ column gives the null hypothesis probability corresponding to χ^2/ν. Confidence limits are given at 95% for one interesting parameter (Δχ^2 = 4); confidence limits that are truncated by the allowed fit range of the parameter, rather than by Δχ^2 = 4 are labelled with ‘∗’.

Source Γ A log N_H χ^2/ν Prob (cm^{−2})

XMM J021908.37−044731.4 1.5^{+0.5}_{−0.6} 1.3^{+1.1}_{−0.8} 21.7^{+0.3}_{−21.7∗} 35 / 13 1.0 × 10^{−3} XMM J021939.22−051133.7 1.4^{+1.3}_{−0.9∗} 1.7^{+11.7}_{−1.3} 22.7^{+0.3}_{−0.4} 22 / 8 5.1 × 10^{−3} XMM J080625.35+244326.0 1.1^{+0.5}_{−0.3} 0.64^{+0.32}_{−0.15} 0.00^{+21.5}_{−0.0∗} 8 / 4 0.10 XMM J083139.11+524206.2 1.7^{+0.8}_{−0.7} 4.3^{+15.9}_{−3.2} 23.2^{+0.2}_{−0.2} 148 / 37 3.9 × 10^{−15} XMM J094239.79+465005.3 1.0^{+0.4}_{−0.3} 0.35^{+0.26}_{−0.13} 21.5^{+0.5}_{−0.6} 17 / 9 5.8 × 10^{−2} XMM J122656.53+013125.2 1.5^{+0.3}_{−0.4} 3.6^{+1.8}_{−1.2} 22.3^{+0.2}_{−0.2} 31 / 16 1.4 × 10^{−2} XMM J133026.09+241356.7 0.5^{+0.2}_{−0.0∗} 0.31^{+0.05}_{−0.04} 0.0^{+20.8}_{−0.0∗} 74 / 33 6.0 × 10^{−5} XMM J150339.60+101605.6 0.5^{+0.5}_{−0.0∗} 0.55^{+0.78}_{−0.09} 21.8^{+0.6}_{−0.4} 35 / 12 4.6 × 10^{−4} XMM J161736.21+122901.5 0.5^{+0.4}_{−0.0∗} 0.29^{+0.23}_{−0.04} 0.0^{+21.5}_{−0.0∗} 5 / 9 0.85

Table 5. Fits to the XMM-Newton spectra with a power law of Γ = 1.9 passing through an ionized medium. A is the power law normalisation in units of 10^{−5} photons cm^{−2} s^{−1} keV^{−1}. The ionisation parameter ξ is in units of erg cm s^{−1}. Confidence limits are given at 95% for one interesting parameter (Δχ^2 = 4); confidence limits that are truncated by the allowed fit range of the parameter, rather than by Δχ^2 = 4 are labelled with ‘∗’. The ‘Prob’ column gives the null hypothesis probability corresponding to χ^2/ν.

Source A log N_H log ξ χ^2/ν Prob (cm^{−2})

XMM J021908.37−044731.4 2.4^{+0.4}_{−0.4} 22.2^{+0.1}_{−0.2} 0.8^{+0.3}_{−0.5} 11 / 13 0.59 XMM J021939.22−051133.7 3.8^{+1.1}_{−1.0} 23.0^{+0.2}_{−0.2} 1.4^{+0.2}_{−0.2} 13 / 8 0.11 XMM J080625.35+244326.0 2.0^{+0.8}_{−0.7} 22.9^{+0.4}_{−0.5} 2.4^{+0.5}_{−0.7} 1 / 4 0.97 XMM J083139.11+524206.2 6.7^{+1.2}_{−1.1} 23.4^{+0.1}_{−0.1} 1.6^{+0.1}_{−0.1} 128 / 37 6.6 × 10^{−12} XMM J094239.79+465005.3 1.2^{+0.4}_{−0.4} 22.4^{+0.2}_{−0.3} 0.2^{+0.8}_{−2.2∗} 25 / 9 2.7 × 10^{−3} XMM J122656.53+013125.2 5.8^{+1.0}_{−0.8} 22.5^{+0.2}_{−0.1} −1.2^{+2.4}_{−0.8} 37 / 16 2.4 × 10^{−3} XMM J133026.09+241356.7 2.7^{+0.4}_{−0.4} 22.6^{+0.1}_{−0.1} 1.0^{+0.1}_{−0.2} 82 / 33 4.9 × 10^{−6} XMM J150339.60+101605.6 7.3^{+2.0}_{−1.7} 23.0^{+0.1}_{−0.2} 1.3^{+0.2}_{−0.3} 40 / 12 8.8 × 10^{−5} XMM J161736.21+122901.5 1.9^{+0.6}_{−0.5} 22.3^{+0.2}_{−0.2} 0.6^{+0.5}_{−0.9} 19 / 9 2.8 × 10^{−2}

compared to < 20% of the overall X-ray population at this flux level (Barcons et al., 2003). This is as expected from AGN unification schemes, because the hardness ratio traces absorption. It is in line with the findings of several Chandra and XMM-Newton surveys, that sources with large hardness ratios are predominantly narrow line objects (e.g. Hasinger et al., 2001; Barger et al., 2002; Silverman et al., 2005) and confirms the specific findings of Della Ceca et al. (2004) and Caccianiga et al. (2004) that a large fraction of XMM-Newton sources with HR2 > −0.3 are narrow line objects. In contrast, BLAGN, which are the majority source population in simple flux limited surveys of equivalent depth (Barcons et al., 2003; Fiore et al, 2003), account for only 7 out of 42 of our sources. These emission line demographics are also remarkably different to those found in hard spectrum sources selected at lower energy: in the hard-spectrum ROSAT sample of Page, Mittaz & Carrera (2001), the majority of the sources are BLAGN with only ∼ 20% identified as NELGs. There are many examples of Xray absorbed AGN in the literature which appear to show far less attenuation to their broad lines than would be expected from a standard Galactic mixture of gas and dust (e.g. Loaring, Page & Ramsay, 2003; Akiyama et al., 2000). However, in most cases the absorbing media responsible for hardening the X-ray spectra of the sources in our sample have successfully suppressed the AGN continuum and broad emission lines.

Only 1 source (XMM J104444.50 − 013313.5) out of 42 has an optical counterpart which is a Galactic star, compared to 11% of the overall X-ray population at S0.5−4.5 > 2 × 10^{−14} erg cm^{−2} s^{−1} (Barcons et al., 2003). In fact it is suprising that even one source in our sample should turn out to be a star, because coronally active stars have optically thin thermal spectra which peak in the range 0.7–1 keV, and thus they should be excluded from our sample by our hardness ratio selection (Eq. 2). This is well established empirically: almost all of the stars in the XMM-Newton Bright Serendipitous Survey have HR2 < −0.3 (Della Ceca et al., 2004). The X-ray spectrum of XMM J104444.50−013313.5 has a similar form to the rest of our sample, and is consistent with an absorbed Γ = 1.9 power law shape. This would be highly anomalous for a Galactic star (e.g. Page et al., 2006b). Therefore we must consider the possibility that the M star is not the correct optical counterpart to XMM J104444.50 − 013313.5. In Fig. 7 we show a 1^′ × 1^′ region, centred on XMM J104444.50 − 013313.5, from an R band image taken with the Wide Field Imager on the 2.2m telescope in La Silla. A second optical counterpart is seen closer to the X-ray source position than the M star, but 2.9 magnitudes fainter. We consider that this fainter optical source is more likely to be the correct optical counter-

14 Page, et al.

Table 6. Two component fits to the XMM-Newton spectra consisting of two power laws, of which one is absorbed by cold material, and the other is not. A_1 is the normalisation of the absorbed power law and A_2 is the normalisation of the unabsorbed component, in units of 10^{−5} photons cm^{−2} s^{−1} keV^{−1}. Both power laws have fixed Γ = 1.9. Confidence limits are given at 95% for one interesting parameter (Δχ^2 = 4); confidence limits that are truncated by the allowed fit range of the parameter, rather than by Δχ^2 = 4 are labelled with ‘∗’. The ‘Prob’ column gives the null hypothesis probability corresponding to χ^2/ν.

Source A_1 A_2 log N_H χ^2/ν Prob (cm^{−2})

XMM J021908.37−044731.4 2.2^{+0.5}_{−0.5} 0.32^{+0.12}_{−0.13} 22.3^{+0.2}_{−0.2} 16 / 13 0.27 XMM J021939.22−051133.7 4.1^{+1.3}_{−1.1} 0.11^{+0.05}_{−0.05} 22.9^{+0.3}_{−0.3} 7 / 8 0.54 XMM J080625.35+244326.0 1.5^{+1.1}_{−0.9} 0.56^{+0.23}_{−0.27} 22.7^{+0.6}_{−0.5} 4 / 4 0.47 XMM J083139.11+524206.2 7.6^{+1.4}_{−1.3} 0.13^{+0.02}_{−0.03} 23.4^{+0.1}_{−0.1} 39 / 37 0.38 XMM J094239.79+465005.3 1.3^{+0.4}_{−0.4} 0.05^{+0.05}_{−0.05} 22.4^{+0.3}_{−0.3} 23 / 9 5.5 × 10^{−3} XMM J122656.53+013125.2 5.7^{+0.7}_{−0.8} 0.00^{+0.09}_{−0.00∗} 22.4^{+0.1}_{−0.1} 37 / 16 2.0 × 10^{−3} XMM J133026.09+241356.7 3.0^{+0.5}_{−0.4} 0.20^{+0.05}_{−0.04} 22.6^{+0.1}_{−0.1} 27 / 33 0.78 XMM J150339.60+101605.6 7.9^{+2.2}_{−1.9} 0.21^{+0.09}_{−0.08} 22.9^{+0.1}_{−0.1} 22 / 12 3.7 × 10^{−2} XMM J161736.21+122901.5 2.4^{+1.1}_{−0.8} 0.23^{+0.09}_{−0.10} 22.5^{+0.3}_{−0.3} 11 / 9 0.30

Table 7. Two component fits to the XMM-Newton spectra consisting of an absorbed, Γ = 1.9 power law, and an optically-thin thermal plasma. A is the power law normalisation in units of 10^{−5} photons cm^{−2} s^{−1} keV^{−1}. The ‘Prob’ column gives the null hypothesis probability corresponding to χ^2/ν. Confidence limits are given at 95% for one interesting parameter (Δχ^2 = 4); confidence limits that are truncated by the allowed fit range of the parameter, rather than by Δχ^2 = 4 are labelled with ‘∗’.

Source A log N_H kT χ^2/ν Prob (cm^{−2}) (keV)

XMM J021908.37−044731.4 2.4^{+0.5}_{−0.5} 22.1^{+0.2}_{−0.2} 0.23^{+0.07}_{−0.07} 10 / 12 0.64 XMM J021939.22−051133.7 3.8^{+1.1}_{−1.0} 22.8^{+0.2}_{−0.2} 0.30^{+0.11}_{−0.08} 3 / 7 0.88 XMM J080625.35+244326.0 1.9^{+0.7}_{−0.7} 22.4^{+0.2}_{−0.5} 0.43^{+0.40}_{−0.23} 1 / 3 0.93 XMM J083139.11+524206.2 7.2^{+1.2}_{−1.2} 23.3^{+0.1}_{−0.1} 1.00^{+0.00∗}_{−0.11} 77 / 40 8.6 × 10^{−5} XMM J094239.79+465005.3 1.4^{+0.4}_{−0.4} 22.5^{+0.1}_{−0.2} 1.00^{+0.00∗}_{−0.18} 16 / 8 4.9 × 10^{−2} XMM J122656.53+013125.2 5.7^{+1.0}_{−0.8} 22.4^{+0.1}_{−0.1} 1.00^{+0.00∗}_{−0.90∗} 37 / 15 1.2 × 10^{−3} XMM J133026.09+241356.7 2.9^{+0.4}_{−0.4} 22.5^{+0.1}_{−0.1} 0.29^{+0.06}_{−0.05} 44 / 32 7.5 × 10^{−2} XMM J150339.60+101605.6 7.3^{+2.3}_{−1.7} 22.8^{+0.2}_{−0.1} 1.00^{+0.00∗}_{−0.21} 27 / 11 4.0 × 10^{−3} XMM J161736.21+122901.5 2.1^{+0.8}_{−0.6} 22.3^{+0.3}_{−0.2} 0.41^{+0.59}_{−0.20} 17 / 8 2.9 × 10^{−2}

part than the M star, and that the proximity of the M star to the X-ray source is coincidental. If this is correct, then XMM J104444.50 − 013313.5 should be assigned to the optically-faint subsample, rather than optically-bright subsample.

6.2 Redshift and luminosity distributions

For each source we have calculated the intrinsic, rest-frame 2-10 keV luminosity, based on the unabsorbed primary power law continuum from the best-fit spectral model, shown in Fig. 6. These luminosities are shown as a function of redshift in Fig. 5. As expected from a flux limited sample,^5 luminosity is strongly correlated with redshift: the linear correlation coefficient of log L2−10 and z is 0.84, and the probability that there is no correlation is < 10^{−11} . The BLAGN of the sample have higher mean redshifts and luminosities (⟨z⟩ = 0.53 ± 0.08, ⟨log L2−10 ⟩ = 43.7 ± 0.19) than the NELGs (⟨z⟩ = 0.30 ± 0.03, ⟨log L2−10 ⟩ = 43.0 ± 0.12), but the differences are only of moderate statistical

5 A uniform flux limit has not been imposed on the sample; nonetheless the sample is flux-limited in that the distance to which an object of any particular luminosity can be detected is determined by its flux.

significance: according to the Kolmogorov-Smirnov test both the redshift distributions and the luminosity distributions differ between the BLAGN and NELGs with 98% confidence.

All but 2 of the sources have 2-10 keV luminosities in excess of 10^{42} erg s^{−1}, and therefore undoubtably contain AGN. The other two objects, which have 2-10 keV luminosities of ∼ 10^{41} erg s^{−1}, do not display deep Balmer absorption lines in their optical spectra, which would indicate a population of young stars. One of these two sources, XMM J161736.21 + 122901.5, has emission lines which classify it as a Seyfert 2, and hence is unambiguously AGN-dominated. The other, XMM J130458.98+175451.8, has only a weak [O II] 3727 Å line, and no Hα emission can be discerned, suggesting that it is not strongly star forming, and hence that its X-ray emission must also come from an obscured AGN.

Most of the objects in our sample have luminosities typical of Seyfert galaxies (10^{41} < L2−10 < 10^{44} ). However, the three highest redshift objects have L2−10 > 10^{44} erg s^{−1}, within the luminosity range of QSOs. Two of these would be classified as ‘type 2’ QSOs according to their optical spectra: XMM J022322.12 − 045738.1 shows only narrow lines, and XMM J122656.53 + 013125.2 is dominated by narrow lines (although the FWHM of Mg II exceeds 1000 km s^{−1}, leading to a BLAGN classification

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 15

Figure 5. 2-10 keV luminosities of the sample as a function of redshift. The luminosities have been computed for the primary power law component in the best fitting model for each source, and are corrected for absorption. The sources enclosed in circles are those which are best fit with a soft component in addition to an absorbed power law. The black circles indicate sources for which the detection of a soft component is secure, while the grey circles indicate sources for which the best-fit model includes a soft component, but for which the alternative ionised-absorber model also produces an acceptable fit (i.e. tentative detections of the soft component). Note that the most luminous source is XMM J122656.53+013125.2, which has an optical spectrum that is dominated by narrow emission lines, but is classified as a BLAGN because it has an Mg II line with FWHM> 1000 km s^{−1}.

according to our scheme). The other, XMM J080625.35 + 244326.0, shows little evidence for optical obscuration, exhibiting a strong ultraviolet continuum and broad emission lines (Fig. 3).

All of the sources in our sample have been imaged at 1.4 GHz by the Very Large Array surveys FIRST (Becker, White & Helfand, 1995) or NVSS (Condon et al., 1998). Only two of our X-ray sources have radio counterparts with 1.4 GHz flux density > 2.5 mJy: XMM J150339.60+101605.6 with a flux density of 113 mJy and XMM J104444.50 − 013313.5 with a flux density of 4.3 mJy. The position of the radio counterpart to XMM J104444.50 − 013313.5 is consistent with the faint counterpart near the centre of the error circle, rather than the M star that we observed with the WHT. The small rate of radio detections implies that the sample is almost completely dominated by radio-quiet objects.

6.3 X-ray spectral characteristics

The spectral fits show that the basic hypothesis that the sources have spectra similar to normal, unobscured AGN, attenuated by large columns of cold absorbing material, is adequate for most of the sources. The underlying continua are in almost all cases consistent with a typical AGN power law of Γ = 1.9. Only one object appears to require a different spectral index: for XMM J122656.53+013125.2 the only model that produces an acceptable fit to the Xray spectrum has Γ = 1.5 ± 0.3. In four of the remaining 8 cases for which the basic Γ = 1.9 power law and cold absorber are rejected, an ionized absorber provides an acceptable fit to the X-ray spectrum. However, in only one case does the ionized absorber provide the highest null-hypothesis probability (i.e. best fit) of all the models tried: XMM J080625.35+244326.0, which is also the only BLAGN in the sample for which the simple power law and cold absorber model fails. Its intrinsic luminosity (L2−10 ∼ 10^{44} erg s^{−1}) is similar to that of the archetypal warmabsorber Seyfert 1 H0557 − 385 (Ashton et al., 2006), suggesting that this is a plausible model. It is interesting to note that in their study of 41 serendipitous XMM-Newton sources, Piconcelli et al. (2002) found evidence for an ionized absorber in only one source, XMMU J140127.7+025603, which is also a BLAGN. Furthermore, in a study of the 13^H Deep Field, Page et al. (2006b) found that at least one of the X-ray absorbed BLAGN (source 101) has an ionised absorber. Unfortunately XMM J080625.35+244326.0 has one of the poorest signal-to-noise X-ray spectra in our sample, and the models incorporating an additional component of soft X-rays also result in acceptable fits. Nonetheless, the success of the ionised absorber model for this object is consistent with a picture in which a significant fraction of X-ray absorbed BLAGN posess ionised absorbers.

For the remaining 7 sources, all classified as NELGs, for which the simplest model (a Γ = 1.9 power law and cold absorber) is rejected, the best fits are obtained when an additional soft component is included. For 4 of these sources this is the only viable model, so we consider these to be ‘secure’ detections of the soft component. We consider the other 3 sources to be ‘tentative’ detections of the soft component, because we cannot rule out the alternative model with an ionised absorber on χ^2 grounds. Both models for the soft component are successful for most, but not all, of these 7 objects: the power law soft excess results in acceptable fits for all but XMM J094239.79+465005.3, and the thermal plasma soft excess results in acceptable fits for all but XMM J083139.11+524206.2 and XMM J150339.60+101605.6. It is somewhat suprising that the power law soft component is as successful as the thermal plasma, given that the soft X-ray emission in nearby Seyfert 2s is readily resolved into lines by grating observations (e.g. Kinkhabwala et al., 2002; Sako et al., 2000; Sambruna et al., 2001). However, it should be noted that an unabsorbed power law soft component was required to reproduce the soft X-ray emission observed in NGC 4151 with ASCA (George et al., 1998), even though this emission was also subsequently resolved into line emission and recombination continua (Ogle et al., 2000; Schurch et al., 2004). As our EPIC spectra are of much lower signal/noise than the archival

16 Page, et al.

ASCA data on NGC 4151, we cannot rule out a soft component dominated by emission lines and recombination continua in XMM J083139.11+524206.2 and XMM J150339.60+101605.6.

It is notable that the 7 NELGs with tentative or secure detections of a soft X-ray component are toward the lower redshift, lower luminosity end of the sample (see Fig. 5). All of them have z < 0.3 and L2−10 < 3 × 10^{43} erg s^{−1}. This may be a natural consequence of the way we have selected and analysed the sample. Firstly, for higher redshift sources a smaller proportion of the soft component is visible within the 0.2-10 keV energy range of EPIC, making it more difficult to detect the soft component. Secondly, the HR2 − σHR2 > −0.3 selection criterion will exclude objects from the sample if the soft component is too strong. For a typical source with Γ = 1.9, log NH = 22.5 and σHR2 = 0.15, the strength of soft component that will remove it from the sample declines from 16 per cent of the primary power law at z = 0.3 to only 7 percent at z = 0.6. Thus a soft excess is simultaneously more difficult to detect, and more likely to violate our selection criterion, at z > 0.3. The upper panel of Fig. 8 shows the 0.5-2 keV luminosities of the soft components in these 7 objects as a function of redshift, based on the model with a powerlaw soft component. The soft component luminosities, like the primary emission, appear to be highly correlated with redshift. This may itself be a selection effect related to our ability to detect the soft component in the presence of the primary absorbed power law. The most powerful soft component of the 7 sources has a 0.5-2 keV luminosity of ∼ 2 × 10^{42} erg s^{−1}, but this is a ‘tentative’ soft component as the spectrum of XMM J021908.37 − 044731.4 can also be modelled with an ionised absorber; of the 4 secure detections of the soft component, the most powerful has a luminosity of ∼ 3 × 10^{41} erg s^{−1}. In the lower panel of Fig. 8 we show the ratios of the soft component flux to the intrinsic (i.e. unabsorbed) flux of the primary power law component. We also show the upper limits for soft component contributions for the NELGs in which no soft component is detected. All of the secure soft component detections have luminosities equivalent to less than 10% that of the primary power law, and more than half of the upper limits are also below this level. Only 1 tentatively detected soft component has a luminosity >10% of the primary power law.

In the XMM-Newton performance-verification observations of the Lockman Hole, Mainieri et al. (2002) find only one source that requires a soft component superimposed on a heavily absorbed primary power law. This object (#50 in Mainieri et al. 2002, and #901 in Lehmann et al., 2001) has similar properties to the objects in our sample that show an additional soft component: narrow optical emission lines, z = 0.204 and L2−10 ∼ 10^{43} erg s^{−1}. In the 13^H Deep Field, Page et al. (2006b) also find one absorbed source (#100), with convincing evidence for an additional soft component. This source has narrow emission lines, z = 0.27 and L2−10 = 4 × 10^{42} erg s^{−1}. Caccianiga et al. (2004) find 3 heavily absorbed objects which require additional soft components among their sample of serendipitous 4.5-7.5 keV selected XMM-Newton sources. Again, all have narrow optical emission lines, z < 0.3, and L2−10 < 3 × 10^{43} erg s^{−1}.

Figure 7. 1^′ ×1^′ r band image of XMM J104444.50−013313.5. The black circle is a 6^{′′} radius circle centred on the X-ray source position. The brigher counterpart is the M star for which we have an optical spectrum. The fainter counterpart is closer to the centre of the circle and thus to the X-ray source position.

However, Mateos et al. (2005b) find 3 heavily absorbed narrow-line AGN in the very deep XMM-Newton observations of the Lockman Hole, which have 0.7 < z < 0.8 and 3 × 10^{43} erg s^{−1} < L2−10 < 10^{44} erg s^{−1}, and which require additional soft components. The soft component 0.5-2 keV luminosities are < 2 × 10^{42} erg cm^{−2} s^{−1} in all 3 cases, similar to the soft component luminosities found in our sample.

Our results are in stark contrast to the soft X-ray properties reported for absorbed sources in the BEP- POSAX HELLAS survey: Vignali et al. (2001) find that additional soft components, equivalent to between 25% and 65% of the primary unabsorbed power law emission, are required in 6/12 heavily absorbed (NH > 5 × 10^{22} cm^{−2}) broad-line sources. However, as we have already discussed, the HR2 selection criterion will exclude objects with very strong soft components from our sample, and a typical source at z = 0.3 with NH = 3 × 10^{22} cm^{−2}, will only be selected in our sample for a soft component equivalent to < 16 per cent of the primary emission. Nonetheless, it is hard to explain such powerful soft components, equivalent to greater than 25 percent of the primary emission, in terms of scattered emission (see Section 6.6). One possibility is that these HELLAS broad line AGN actually posess ionised absorbers, which in the hardness ratio analysis performed by Vignali et al. (2001), could not be distinguished from cold absorption and a strong soft component, as would be the case for XMM J080625.35+244326.0 in our sample. For NELGs, Vignali et al. (2001) report that 2 absorbed HELLAS objects with narrow emission lines showed evidence for additional soft X-ray components, equivalent to 5% and 35% of the primary power law emission. While the HELLAS source with a soft component equivalent to

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 17

Figure 6. X-ray spectra of the sources (datapoints) together with absorbed Γ = 1.9 power law models (black stepped lines). Both model and data have been divided by the effective area as a function of energy, and the spectra are displayed as E × F_E so that an unabsorbed power law with Γ = 2 would be a horizontal line. When the absorbed Γ = 1.9 power law model does not provide an acceptable fit to the data, the best alternative model is shown in grey. For XMM J021908.37−044731.4, XMM J021939.22−051133.7, and XMM J094239.79+465005.3 the grey model includes a mekal component, for XMM J083139.11+524206.2, XMM J133026.09+241356.7, XMM J150339.60+101605.6 and XMM J161736.21+122901.5 the grey model includes an unabsorbed power law component, for XMM J080625.35+244326.0 the grey model has an ionised absorber, and for XMM J122656.53+013125.2 the grey model has a power law index of Γ = 1.5.

18 Page, et al.

Figure 6 continued

5% of the primary power law is comparable with our findings, 35% is larger than any soft component that would be expected in our sample by the HR2 selection cretierion.

6.4 X-ray bright, optically normal galaxies

Three sources in our sample (XMM J095231.84 − 015016.1, XMM J133913.92 − 314421.9 and

XMM J134656.75 + 580316.5) have 2-10 keV luminosities of 10^{43} − 10^{44} ergs s^{−1}, but show no emission lines in their optical spectra; they are therefore “X-ray bright, opticallynormal galaxies” (XBONGs; see Comastri et al., 2002; Griffiths et al., 1995; Elvis et al., 1981). As discussed by Severgnini et al. (2003) and Moran, Filippenko & Chornock (2002), the majority of such objects are thought to be AGN in which the

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 19

Figure 6 continued

emission lines are undetectable against the host galaxy starlight except in high signal to noise observations with subarcsecond spatial resolution. As discussed in Page et al. (2003) and Severgnini et al. (2003), both absorbed and unabsorbed AGN could contribute to the XBONG population. Our three sources are consistent with the absorbed AGN scenario, as all three show significant X-ray absorption.

6.5 Limits on the gas-to-dust ratios in BLAGN

Fig. 9 shows the distribution of absorber NH from the best fit models as a function of redshift. NH ranges from 7 × 10^{21} cm^{−2} to 3 × 10^{23} cm^{−2}, with a mean of 3 × 10^{22} cm^{−2}. The distributions of NH for the BLAGN, NELGs and galaxies are indistinguishable with a KS test. There is no correlation between log NH and redshift (linear correlation coefficient of −0.05), which is interesting because the hardness ratio criterion (Equation 2) should select objects with higher column density at higher redshift and higher luminosities. The paucity of luminous (L2−10 > 10^{44} erg cm^{−2} s^{−1}) sources with NH > 10^{23} cm^{−2} in the sample implies either that such sources are rare, or that the optical limits have excluded these objects from the sample.

It is rewarding to compare our sample with the sample of ROSAT sources presented in Page, Mittaz & Carrera (2001), which is also a hardspectrum, X-ray colour selected sample, has a 0.5-2 keV flux limit which is similar to our 2-4.5 keV flux limit, and has a similar optical magnitude limit to the sample presented here. Our XMM-Newton sample is selected at higher energies, so that at any given redshift it selects objects with higher column densities than the ROSAT sample. Whereas our XMM-Newton sample contains no objects at z > 1, almost a quarter of the ROSAT

20 Page, et al.

Figure 8. Top panel: 0.5-2 keV luminosities of the soft components (based on the power law model) for the 7 NELGs with a spectrum more complex than an absorbed power law. The filled symbols indicate those NELGs for which acceptable fits were only found with an additional soft component (i.e. solid detections of the soft component), while the open symbols indicate those objects for which acceptable fits could also be found with an ionised absorber instead of a soft component (i.e. tentative detections of the soft component). Bottom panel: ratios of the soft (unabsorbed) power law normalisation to that of the primary (absorbed) power law, for the NELGs. Filled and open triangles indicate the same objects as in the top panel, while upper limits are given for those objects that could be fitted with the absorbed power law model (see Table 3).

sample (14/62 objects) have z > 1, all of which are BLAGN with 21.4 < log NH < 22.6; most of them show little attenuation by dust in their ultraviolet spectra and have R < 21 (e.g. Page, Mittaz & Carrera, 2000). At z > 1 the flux limits and X-ray colour selection of our survey mean that it is most sensitive to AGN with 23 < log NH < 23.5. Therefore the lack of BLAGN with NH > 10^{23} cm^{−2}, and the absence of any objects at z > 1 in our R < 21 XMM-Newton sample implies that BLAGN with NH > 10^{23} cm^{−2}, but without significant attenuation in the UV, are rare. Assuming that this is because of extinction in the optical/UV, we can estimate the maximum effective gas-to-dust ratio^6 which is found in our X-ray absorbed AGN sample as follows. To have been extinguished beyond the optical limits of the sample (R = 21), BLAGN at z ∼ 1 would have to be attenuated by more

6 The Galactic gas-to-dust ratio which would produce equivalent UV extinction for the X-ray derived cold column density.

Figure 9. Column densities of the sample as a function of redshift.

than 1 magnitude at 3500 Å (restframe) compared to the ROSAT sample of Page, Mittaz & Carrera (2001) in which all but two BLAGN have R < 20. This would be equivalent to an extinction of E(B −V ) = 0.2 for Galactic dust(Rieke & Lebofsky, 1985), which would correspond to NH ∼ 10^{21} cm^{−2} for a Galactic gas-to-dust ratio (Bohlin, Savage & Drake, 1978). Thus we should observe BLAGN with z > 1 and NH > 10^{23} cm^{−2} in our sample if they have effective gas-to-dust ratios ≥ 100× Galactic. Since we do not observe such sources, we infer that BLAGN with effective gas-to-dust ratios ≥ 100× Galactic are absent from our sample.

The space density of z > 1 X-ray absorbed BLAGN with 21.4 < log NH < 22.6 is ∼10% the space density of unobscured BLAGN (Akiyama et al., 2000; Mainieri et al., 2002; Page et al., 2004; Perola et al., 2004; Silverman et al., 2005; Page et al., 2006b). The lack of BLAGN with 23 < log NH < 23.5 in our XMM-Newton sample (at higher energies than the ROSAT sample, but with a similar limiting flux) implies that such objects have an even smaller space density, equivalent to no more than a few percent of the unobscured population. It is interesting to compare this to the space density of broad absorption line (BAL) QSOs, which make up ∼ 15% of the optical QSO population in the redshift interval (1.7 < z < 3.5) where the BALs can be detected (Reichard et al., 2003), and approximately half of which have NH > 10^{23} cm^{−2} (Gallagher et al., 2002). BALQSOs are the only subset of the optically-selected BLAGN population which appear

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 21

to have effective gas-to-dust ratios ∼ 100×Galactic (Maiolino et al., 2001), showing both strong UV emission and large X-ray column densities. The limits from our survey imply that BALQSOs will also form the majority of BLAGN with extreme gas-to-dust ratios amongst the X-ray selected population.

6.6 Implications for the AGN population and geometric unification

The phenomonology of X-ray absorbed AGN is an important test of the AGN unification scheme, which postulates that AGN are surrounded by a dense obscuring torus of dust and gas (Antonucci, 1993), or optically thick material associated with the outer accretion disc (e.g. Elitzur & Shlosman, 2006), and therefore the X-ray and optical absorption properties of AGN are primarily determined by their orientation with respect to the observer. Overall, the results found here and elsewhere are in broad agreement with this unification scheme, because the majority of the sources that show significant X-ray absorption (i.e. NH > 10^{22} cm^{−2}) are NELGs, and so have optical properties consistent with an edge-on perspective, namely narrow emission lines and absent or highly-attenuated nuclear UV/optical continua. From the X-ray spectra of 31 such NELGs presented earlier, there are 4 secure detections of an additional soft component which is equivalent to between 2 and 7 per cent of the primary, absorbed, emission. In addition, there are 3 tentative detections, and for most of the sources the upper limits do not rule out a soft component equivalent to several per cent of the primary emission. The secure detection rate alone implies that such components are present in > 4% of the population (at 95% confidence, based on the estimators of Gehrels, 1986). Thus a non-negligible fraction of these heavily absorbed, narrow-line objects show an additional component of soft X-ray emission that apparently escapes the obscuring torus.

In the context of the unified scheme, some soft Xray emission is expected to arise from obscured AGN in the form of X-rays that are reprocessed or scattered in the ionisation cones of the AGN. In such a geometry, the amount of soft X-ray radiation that can be directed into our line of sight depends on the opening angle of the torus, and the fraction of the soft X-ray emission that is absorbed or scattered in the ionisation cones. Assuming that the torus covers 80% of the sky, as inferred in optical and X-ray studies of local AGN (Maiolino & Rieke, 1995; Risaliti, Maiolino & Salvati, 1999), and that the radiation that is intercepted within the ionisation cones is scattered or re-emitted isotropically (so that half is directed back towards the torus), then the luminosity of the scattered component will be 10 per cent of the luminosity that was absorbed or scattered within the ionisation cone. Thus to produce a soft component equivalent to 5 percent of the primary power law requires that ∼ half of the soft X-rays are absorbed or scattered within the ionisation cone. For such a large fraction of the soft X-ray radiation to be intercepted within the ionisation cone implies that the cone must contain an ionised absorber with a large column density.

Thus within the context of the unified scheme, the fraction of absorbed, narrow line objects that show an additional soft component, equivalent to several per cent of the primary emission, should be matched by (at least) the same fraction (i.e. > 4 per cent) of broad line objects displaying significant absorption (≥ 50 per cent) of their soft X-rays from an ionised absorber. Note that this is a lower limit to the fraction of heavily absorbed broad line objects, since ionised absorption close to the base of the ionisation cone will not redirect X-rays over the edge of the torus.

While many Seyfert 1s in the local Universe have ionised absorbers (Reynolds, 1997; George et al., 1998; Blustin et al., 2005), only a few nearby objects such as NGC 3783 (Blustin et al., 2002; Netzer et al., 2003; Krongold et al., 2003; Behar et al., 2003) and H 0557-385 (Ashton et al., 2006) are known to absorb more than half of the incident soft X-ray emission. Nonetheless, the presence of these 2 objects within the 19 BLAGN in the Piccinotti et al. (1982) sample is consistent with our expectation of > 4 per cent. For more distant objects, the fraction of BLAGN with heavy soft X-ray absorption is ∼ 10 per cent (Akiyama et al., 2000; Mainieri et al., 2002; Page et al., 2004; Perola et al., 2004; Silverman et al., 2005; Page et al., 2006b). This is compatible with our findings for the NELGs provided that > 40 per cent of these X-ray absorbed BLAGN are viewed pole-on and harbour high-opacity ionised absorbers, so that > 4 per cent of all BLAGN have this property. Evidence that this could be the case is building up: within the sample presented here an ionised absorber provides the best fit to the spectrum of XMM J080625.35 + 244326.0, and examples of X-ray absorbed BLAGN which require ionised absorbers have also been found by Piconcelli et al. (2002), Page et al. (2006a), and Page et al. (2006b). Objects classified as “soft X-ray weak quasars” (Brand, Laor & Wills, 2000) also appear to be BLAGN with substantial soft X-ray absorption, and the absorbers in a significant fraction of these are also found to be ionised (Schartel et al., 2005). These results indicate that within the context of the unified scheme, the current limits on the scattered components in narrow line objects are compatible with the numbers of X-ray absorbed broad line objects.

Finally, it is worth asking how the three galaxies without discernable optical emission lines fit within this picture. In our sample, they are outnumbered ∼10:1 by the NELGs, and so are a minority of the absorbed AGN population. In trying to fit these objects with the unified scheme, we can envisage four possible hypotheses for the apparent weakness of their optical emission lines: (i) the AGN are so weak compared to the host galaxies that the emission lines are undetectable against the bright galaxy continua, (ii) the tori in these objects have covering factors approaching unity, (iii) their narrow line regions are themselves obscured, or (iv) the gas in their narrow line regions is so tenuous as to make the optical emission lines anomalously weak. Hypothesis (i) can be ruled out immediately: their optical to X-ray flux ratios lie within 0.5 dex of the fX /fR = 1 line shown in Fig. 2, and are indistinguishable from those of the NELGs. In all the remaining possibilities, the fraction of soft X-rays that can

22 Page, et al.

be reprocessed and redirected into our line of sight should be negligible, and so significant soft X-ray components in their X-ray spectra would be inconsistent with the unified scheme. Soft components are not detected in any of the 3, as expected from the unified scheme.

7 CONCLUSIONS

We have defined the XMM-SSC survey of hard-spectrum XMM-Newton sources, and presented optical and X-ray spectra for an optically-bright (r < 21) sample of 42 sources. We find that our hardness ratio selection criterion provides a very clean sample of X-ray absorbed AGN, in agreement with the findings of Caccianiga et al. (2004) and Della Ceca et al. (2004). Every source in the optically bright sample is an AGN with 21.8 < log NH < 23.4, with the possible exception of one source. This source has an optical counterpart which is a Galactic M star, but we argue that a fainter optical counterpart, closer to the Xray source position, is more likely to be the correct optical counterpart. Most (36/42) of the sources have X-ray luminosities characteristic of Seyferts (10^{42} erg s^{−1} < L2−10 < 10^{44} erg s^{−1}). The majority of the sources (31/42) show only narrow emission lines (FWHM < 1000 km s^{−1}) in their optical spectra, although a small number (7) of the sources also show broad emission lines, and 3 sources have no detectable emission lines in their optical spectra. None of the sources have z > 1. The lack of broad line AGN at higher redshifts, luminosities and column densities implies that the effective gas-to-dust ratio in AGN absorbers rarely exceeds 100× Galactic, and it is unlikely that more than a few percent of broad line AGN have X-ray column densities of cold gas which are > 10^{23} cm^{−2}. In 7 of the 31 NELGs an absorbed power law is unable to fit the Xray spectrum satisfactorily; an additional soft component provides acceptable fits for these objects. In our sample, these soft components are only observed in narrow emission line objects which are relatively nearby (z < 0.3) and have low-moderate luminosity (L2−10 < 3 × 10^{43} erg s^{−1}). These soft components are a natural consequence of the AGN unified scheme if they are soft X-rays that have been absorbed and re-emitted within the narrow line region. This would require that > 4 per cent of broad line AGN have ionised absorbers with > 50 per cent opacity to soft X-rays, indicating that a substantial fraction of X-ray absorbed broad-line AGN have ionised absorbers.

8 ACKNOWLEDGMENTS

Based on observations obtained with XMM-Newton, an ESA science mission with instruments and contributions directly funded by ESA Member States and NASA. This research was also based on observations made at the William Herschel Telescope which is operated on the island of La Palma by the Isaac Newton Group in the Spanish Observatorio del Roque de los Muchachos of the Instituto de Astrofisica de Canarias, and on observations collected at the European Southern Observatory, Chile, ESO No. 71.A-0444. This research has made use of the

NASA/IPAC Extragalactic Database (NED) which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the National Aeronautics and Space Administration. This research has made use of data obtained from the SuperCOSMOS Science Archive, prepared and hosted by the Wide Field Astronomy Unit, Institute for Astronomy, University of Edinburgh, which is funded by the UK Particle Physics and Astronomy Research Council. FJC acknowledges financial support from the Spanish Ministerio de Educacion Ciencia, under projectw ESP2003-00812 and ESP2006-13608- C02-01. RDC and PS acknowledge partial financial support by hte MIUR (Cofin-03-02-23) and INAF. We thank Natalie Webb for useful comments.

REFERENCES

Ashton C.E., Page M.J., Branduardi-Raymont G., Blustin A.J., 2006, MNRAS, 366, 521 Akiyama M., et al., 2000, ApJ, 532, 700 Alexander D.M., et al., 2003, AJ, 126, 239 Antonucci R., 1993, ARA&A, 31, 473 Barcons X., et al., 2002, A&A, 382, 522 Barcons X., Carrera F.J., Ceballos M.T., 2003, MNRAS, 339, 757 Barcons X., Carrera F.J., Ceballos M.T., Mateos S., Page M.J., Pérez-Fournon I., Watson M.G., 2003, AN, 324, 44 Barcons X., et al., 2007, A&A, submitted Barger A.J., et al., 2002, AJ, 124, 1839 Barger A.J., et al., 2003, AJ, 126, 632 Barr P., White N.E., Sanford P.W. & Ives J.C., 1977, MNRAS, 181, 43P Bauer F.E., Alexander D.M., Brandt W.N., Schneider D.P., Treister E., Hornschemeier A.E., Garmire G.P., 2004, AJ, 128, 2048 Becker R.H., White R.L. & Helfand D.J., 1995, ApJ, 450, 559 Behar E., Rasmussen A.P., Blustin A.J., Sako M., Kahn S.M., Kaastra J.S., Branduardi-Raymont G., Steenbrugge K.C., 2003, ApJ, 598, 232 Blustin A.J., Branduardi-Raymont G., Behar E., Kaastra J.S., Kahn S.M., Page M.J., Sako M., Steenbrugge K.C., 2002, A&A, 392, 453 Blustin A.J., Page M.J., Fuerst S.V., Branduardi- Raymont G., Ashton C.E., 2005, A&A, 431, 111 Bohlin R.C., Savage B.D. & Drake J.F., 1978, ApJ, 224, 132 Boller Th., et al., 2003, A&A, 397, 557 Brandt W.N., Laor A., & Wills B.J., 2000, 2005, A&A, 433, 455 Brandt W.N., et al., 2001, AJ, 122, 2810 Brinkman A.C., Kaastra J.S., van der Meer R.L.J., Kinkhabwala A., Behar E., Kahn S.M., Paerels F.B.S., Sako M., 2002, A&A, 396, 761 Caccianiga A., et al., 2004, A&A, 416, 901 Carrera F.J., Page M.J., Mittaz J.P.D., 2004, A&A, 420, 163 Comastri A., Setti, G., Zamorani, G., & Hasinger, G., 1995, A&A, 296, 1 Comastri A., et al., 2002, ApJ, 571, 771

The XMM-SSC survey of hard-spectrum XMM-Newton sources 1: optically bright sources 23

Condon J.J., Cotton W.D., Greisen E.W., Yin Q.F., Perley R.A., Taylor G.B., Broderick J.J., 1998, AJ, 115, 1693 Cowie L.L., et al., 2003, ApJ, 584, L57 Della Ceca R., et al., 2004, A&A, 428, 383 Dwelly T., Page M.J., Loaring N.S., Mason K.O., McHardy I.M., Gunn K.F., Sasseen T., 2005, MNRAS, 360, 1426.

Dwelly T. & Page M.J., 2006, MNRAS, 372, 1755 Dickey J.M. & Lockman F.J., 1990, ARA&A, 28, 215 Elitzur M. & Shlosman I., 2006, ApJ, 648, L101 Elvis M., Schreier E.J., Tonry J., Davis M., Huchra J.P., 1981, ApJ, 246, 20 Elvis M., Fiore F., Wilkes B.J., McDowell J.C., Bechtold J., 1994, ApJ, 422, 60 Elvis M., Marengo M., Karovska M., 2002, ApJ, 567, L107 Fabian A.C., 1999, MNRAS, 308, L39 Fabian A.C. & Iwasawa K., 1999, MNRAS, 303, L34 Fasano G. & Franceschini A., 1987, MNRAS, 225, 155 Fiore F., et al., 2003, A&A, 409, 79 Franceschini A., Braito V., Fadda D., 2002, MNRAS, 335, L51 Franceschini et al., 2003, MNRAS, 343, 1181 Gallagher S.C., Brandt W.N., Chartas G. & Garmire G.P., 2002, ApJ, 567, 37 Gehrels N., 1986, ApJ, 303, 336 George I.M., Turner T.J., Netzer H., Nandra K., Mushotzky R.F., Yaqoob T., 1998, ApJS, 114, 73 Gilli R., Salvati M., Hasinger G., 2001, A&A, 366, 407 Giacconi R., et al., 2001, ApJ, 551, 624 Griffiths R.E., Georgantopoulos I., Boyle B.J., Stewart G.C., Shanks T., della Ceca R., 1995, MNRAS, 275, 77 Hasinger G., et al., 2001, A&A, 365, L45 Holt S.S., Mushotzky R.F., Boldt E.A., Serlemitsos P.J., Becker R.H., Szymkowiak A.E., White N.E., 1980, ApJ, 241, L13 Kinkhabwala et al., 2002, ApJ, 575, 732 Krongold Y., Nicastro F., Brickhouse N.S., Elvis M., Liedahl D.A., Mathur S., 2003, ApJ, 597, 832 La Franca F., et al., 2005, ApJ, 635, 864 Lawrence A. & Elvis M., 1982, ApJ, 256, 410 Lehmann I., et al., 2001, A&A, 371, 833 Loaring N.S., Page M.J., Ramsay G., 2003, MNRAS, 345, 865 Maccacaro T., Gioia I.M., & Stocke J.T., 1984, ApJ, 283, 486 Maccacaro T., Gioia I.M., Wolter A., Zamorani G., Stocke J.T., 1988, ApJ, 326, 680 Maiolino R., & Rieke G.H., 1995, ApJ, 454, 95 Maiolino R., Marconi A., Salvati M., Risaliti G., Severgnini P., Oliva E., La Franca F. & Vanzi L., 2001, A&A, 365, 28 Mainieri V., Bergeron J., Hasinger G., Lehmann I., Rosati P., Schmidt M., Szokoly G., Della Ceca R., 2002, A&A, 393, 425 Marshall F.E., et al., 1993, ApJ, 405, 168 Mateos S., et al., 2005a, A&A, 433, 855 Mateos S., Barcons X., Carrera F.J., Ceballos M.T., Hasinger G., Lehmann I., Fabian A.C., Streblyanska A., 2005b, A&A, 444, 79 McHardy I.M., et al., 2003, MNRAS, 342, 802

Mittaz J.P.D., et al., 1999, MNRAS, 308, 233 Moran E.C., Filippenko A.V., Chornock R., 2002, ApJ, 579, L71 Mushotzky R.F., 1982, ApJ, 256, 92 Netzer H., et al., 2003, ApJ, 599, 933 Ogle P.M., Marshall H.L., Lee J.C., Canizares C.R., 2000, ApJ, 545, L81 Osterbrock D.E. & Pogge R.W., 1985, ApJ, 297, 166 Page M.J., Mittaz J.P.D. & Carrera F.J., 2000, MNRAS, 312, 207 Page M.J., Mittaz J.P.D. & Carrera F.J., 2001, MNRAS, 325, 575 Page M.J., Davis S.W., Salvi N.J., 2003, MNRAS, 343, 1241 Page M.J., et al., 2003, AN, 324, 101 Page M.J., Stevens J.A., Ivison R.J., Carrera F.J., 2004, ApJ, 611, L85 Page M.J., Carrera F.J., Ebrero J., Stevens J.A., Ivision R.J., 2006, in proceedings of ‘The X-ray Universe 2005’, ESA SP-604, 647 Page M.J., et al., 2006, MNRAS, 369, 156 Perola G.C., et al., 2004, A&A, 421, 491 Piccinotti G., Mushotzky R.F., Boldt E.A., Holt S.S., Marshall F.E., Serlemitsos P.J., Shafer R.A., Piconcelli E., Cappi M., Bassani L., Fiore F., Di Cocco G., Stephen J.B., 2002, A&A, 394, 835 Reichard T.A., et al., 2003, AJ, 126, 2594 Reynolds C.S., 1997, MNRAS, 286, 513 Rieke G.H. & Lebofsky M.J., 1985, ApJ, 288, 618 Risaliti G., Maiolino R. & Salvati M., 1999, ApJ, 522, 157 Rosati P., et al., 2002, ApJ, 566, 677 Sako Masao., Kahn S.M., Paerels F., Liedahl D.A., 2000, ApJ, 543, L115 Sambruna R.M., Netzer H., Kaspi S., Brandt W.N., Chartas G., Garmire G.P., Nousek J.A., Weaver K.A., 2001, ApJ, 546, L13 Sanders D.B., Soifer B.T., Elias J.H., Madore B.F., Matthews K., Neugebauer G., Scoville N.Z., 1988, ApJ, 325, 74 Schartel N., Rodríguez-Pascual P.M., Santos-Lleó M., Clavel J., Guainazzi M., Jimínez-Bailón E., Piconcelli E., 2005, A&A, 433, 455 Schurch N.J., Warwick R.S., Griffiths R.E., Kahn S.M., 2004, MNRAS, 350, 1 Severgnini P., et al., 2003, A&A, 406, 483 Setti G., Woltjer L., 1989, A&A, 224, L21 Shuder J.M. & Osterbrock D.E., 1981, ApJ, 250, 55 Silverman J.D., et al., 2005, ApJ, 618, 123 Steffen A.T., Barger A.J., Cowie L.L., Mushotzky R.F. & Yang Y., 2003, ApJ, 596, L23 Stocke J.T., Morris S.L., Gioia I.M., Maccacaro T., Schild R., Wolter A., Fleming T.A., Henry J.P., 1991, ApJS, 76, 813 Szokoly G.P., et al., 2004, ApJS, 155, 271 Tozzi P., et al., 2006, A&A, 451, 457 Turner T.J., George I.M., Nandra K., Mushotzky R.F., 1997, ApJS, 113, 23 Treister E., et al., 2004, ApJ, 616, 123 Ueda Y., et al., 2003, ApJ, 598, 886 Ueno S., Mushotzky R.F., Koyama K., Iwasawa K., Awaki H., Hayashi I., 1994, PASJ, 46, L71

24 Page, et al.

Vignali C., Comastri A., Fiore F., La Franca F., 2001, A&A, 370, 900 Watson M.G., et al., 2003, AN, 324, 89 Worsley M.A., Fabian A.C., Barcons X., Mateos S., Hasinger G., Brunner H., 2004, MNRAS, 352, L28