arXiv:0707.4556v1 [astro-ph] 31 Jul 2007

Astron. Nachr. / AN . . . , No. . . . , 1 – 8 (. . . ) / DOI This.is/not.aDOI

Photometric monitoring of the blazar 3C 345 for the period 1996 – 2006^⋆

B. Mihov^{⋆⋆}, R. Bachev, L. Slavcheva-Mihova, A. Strigachev, E. Semkov, and G. Petrov

Institute of Astronomy, Bulgarian Academy of Sciences, 72 Tsarigradsko Chausse Blvd., 1784 Sofia, Bulgaria

Received . . . , accepted . . . Published online later

Key words Quasars: individual: 3C 345 – techniques: photometric

We present the results of the blazar 3C 345 monitoring in Johnson-Cousins BV RI bands for the period 1996 – 2006. We have collected 29 V and 43 R data points for this period; the BI light curves contain a few measurements only. The accuracy of our photometry is not better than 0.03 mag in the V R bands. The total amplitude of the variability obtained from our data is 2.06 mag in the V band and 2.25 mag in the R one. 3C 345 showed periods of flaring activity during 1998/99 and 2001: a maximum of the blazar brightness was detected in 2001 February – 15.345 mag in the V band and 14.944 mag in the R one. We confirm that during brighter stages 3C 345 becomes redder; for higher fluxes the colour index seems to be less dependent on the magnitude. The intra-night monitoring of 3C 345 in three consecutive nights in 2001 August revealed no significant intra-night variability; 3C 345 did not show evident flux changes over timescales of weeks around the period of the intra-night monitoring. This result supports the existing facts that intra-night variability is correlated with rapid flux changes rather than with specific flux levels.

© . . . WILEY-VCH Verlag GmbH & Co. KGaA, Weinheim

1 Introduction

Blazars are a sub-class of active galactic nuclei (see the review paper of Angel & Stockman 1980). The most notable feature of blazars is their violent variability at all wavelengths on time scales from about an hour or less to years. It is now believed that the physical processes in relativistic jets are responsible for the observed behaviour of blazars (e.g. Schramm et al. 1993a; Wagner et al. 1995; Otterbein et al. 1998; Lobanov & Roland 2005).

The violent variability of blazars is very helpful in understanding their nature; so, they were targets of a number of monitoring campaigns like Hamburg Quasar Monitoring (HQM; Borgeest & Schramm 1994; Schramm et al. 1994a, 1994b) in the past and Whole Earth Blazar Telescope (WEBT) in the present days. In particular, the international coordinated programme WEBT proved to be very effective in obtaining blazar light curves of dense temporal coverage (e.g. Villata et al. 2006).

We started to monitor selected blazars with the 2.0-m telescope of the Rozhen National Astronomical Observatory (NAO), Bulgaria, in 1996 inspired by Dr. K.-J. Schramm and following the international collaborations MEGAPHOT (Schramm et al. 1993b) and Joint Optical Monitoring Programme of Quasars (JOMPQ; Schramm et al. 1994c). The

⋆ Based on observations obtained with the 2-m and 50/70-cm telescopes of the Rozhen National Astronomical Observatory, and the 60-cm telescope of the Belogradchik Astronomical Observatory, which are operated by the Institute of Astronomy, Bulgarian Academy of Sciences, and with the 1.3-m telescope of the Skinakas Observatory, Crete, Greece; Skinakas Observatory is a collaborative project of the University of Crete, the Foundation for Research and Technology – Hellas, and the Max-Planck-Institut für Extraterrestrische Physik.

⋆⋆ Corresponding author: e-mail: bmihov@astro.bas.bg

blazar 3C 345 (1641+399, z = 0.5928) is among the most highly variable blazars in our list. Regular photometric monitoring of 3C 345 has been carried out since 1965; the historical light curve of the source was constructed and studied by Schramm et al. (1993a), Zhang et al. (1998) and Howard et al. (2004, hereafter H04). We present in this paper the results of our monitoring of the blazar 3C 345 for the period 1996 – 2006.

Another aim of this study is to present our results of the intra-night monitoring of 3C 345; note that the characteristics of 3C 345 intra-night variability are not well established. Kidger (1989) was the first one who drew attention to the intra-night variability of 3C 345: he detected flickering on time scales of hours with amplitudes of about 0.1 – 0.2 mag. Furthermore, Kidger & de Diego (1990) reported 0.47 B mag brightness drop in 13 minutes, whereas H04 detected no significant intra-night variability; H04 found that the occurrences of intra-night variability are correlated temporally with long-term optical activity of the objects studied. Thus, intra-night monitoring of 3C 345 was undertaken by us in order to shed more light on the intra-night variability characteristics of this source.

The paper is organized as follows. The observations and data reduction are described in Sect. 2. The photometry and resulting light curves are presented in Sect. 3. The results are discussed in Sect. 4. A brief summary of our results is presented in Sect. 5.

2 Observations and data reduction

The observational data of 3C 345 were obtained using the 2.0-m Ritchey-Chrétien and the 0.5/0.7-m Schmidt telescopes

© . . . WILEY-VCH Verlag GmbH & Co. KGaA, Weinheim

Table 1 Johnson-Cousins BV RI magnitudes of stars #4 and #19 in the field of 3C 345. Star B V R I σB σV σR σI #4 16.044 15.245 14.768 14.337 0.017 0.007 0.006 0.011

#19 16.452 15.228 14.470 13.806 0.016 0.006 0.006 0.014

Fig. 1 The field (8.3 × 8.3 arcmin wide) containing the blazar 3C 345, reference star #19, and control star #4. This image was taken by AS at SO through the R filter; East is to the left, North is at the top.

of NAO, the 0.6-m Cassegrain telescope of the Belogradchik Astronomical Observatory (BAO), Bulgaria, and the 1.3-m Ritchey-Chrétien telescope of the Skinakas Observatory (SO), Crete, Greece. Standard Johnson-Cousins BV RI filters were used in all observations. Focal reducers were occasionally used at NAO (FoReRo) and BAO. The following CCD cameras were used as detectors of the 2.0-m telescope of NAO: 375 × 242 SBIG ST-6, 1024 × 1024 Photometrics AT200, and 1340×1300 Princeton Instruments VersArray:1300B. The CCD cameras ST-6 and VersArray:1300B were used in single nights: 1996 August 12/13 and 2005 March 12/13, respectively. The 0.5/0.7-m telescope of NAO and the 0.6-m telescope of BAO were equipped with identical 1530 × 1020 SBIG ST-8 CCD cameras. The 1.3-m telescope of SO was equipped with 1024 × 1024 Photometrics CCD camera.

Multiple V R frames of the 3C 345 field were taken in each night allocated for the monitoring; BI frames were taken occasionally. Twilight flat field, zero exposure, and dark current frames were taken as well. Dark frames were taken when ST-6/8 CCD cameras were used and zero frames were taken in the case of the other cameras. The binning factor of the CCD cameras was changed depending on the observing conditions.

The intra-night monitoring of 3C 345 was performed at BAO by RB during three nights of 2001 August: 18/19, 19/20, and 20/21. The blazar was imaged through V RI filters for a period of about 3 – 4 hours each night; the exposures were 120 sec for all passbands.

Reduction of the 3C 345 frames was done depending on the CCD camera used: ST-6/8 CCD data were dark subtracted and flat fielded using the camera software, whereas the data acquired by means of the other cameras were debiased and flat fielded using ESO-MIDAS package. The cosmic ray hits were cleaned and the individual frames were aligned and co-added using ESO-MIDAS. The frames obtained in the course of the intra-night monitoring were dark subtracted and flat fielded only.

3 Photometry and light curves

We used differential photometry technique to obtain the 3C 345 light curves in order to be independent of the photometric conditions. Field stars #4 and #19, calibrated by González- Pérez, Kidger & Martín-Luis (2001), were used as a control star and as a reference one, respectively (see Table 1 and Fig. 1). Stars #4 and #19 are designated as D and E, respectively, in Smith’s et al. (1985) paper.

The flux measurements of all objects of interest were performed using DAOPHOT package (Stetson 1987) run within ESO-MIDAS. Instrumental magnitudes were measured through a set of apertures with radii of 1/2/3×FWHM pixels; the sky background value was estimated in a centred annulus with an inner radius of 7 × FWHM pixels and containing 1000 pixels. The calibrated magnitudes of 3C 345 were calculated relative to star #19 without taking into account the colour term in the transformation equations; the light curves of star #4 were obtained in the same way as the blazar ones and were used to estimate the accuracy of the photometry.

We adopted as final magnitudes the ones measured through 1×FWHM radius aperture – using this aperture the control star light curves show the smallest clipped standard deviation in all passbands. The 3σ clipping technique was used to eliminate the deviant data points – if such are present – in the control star light curve under the assumption of the control and reference star non-variability. The blazar data points corresponding to the eliminated control star points were also eliminated. We got a total of three V band and three R band data points removed from the light curves by this technique. The formal errors of the final blazar and control star magnitudes include the errors of the instrumental magnitudes as returned by DAOPHOT and the errors of the standard magnitudes of reference star #19.

The nightly weight-mean V RI magnitudes of the blazar were obtained from the intra-night data and added to the

Fig. 2 V band light curves of the blazar 3C 345 and of control star #4. The dashed line represents the standard V band magnitude of star #4 (see Table 1). For most of the data points the error bars are smaller than the symbols.

long-term light curve. The errors of the weight-mean magnitudes were calculated taking the larger between (1) the error estimate based on the individual magnitude errors, and (2) the error estimate based on the scatter of magnitudes involved in averaging about their weight-mean value.

The measured light curves of 3C 345 are tabulated in Table 2 (B band), Table 3 (V band), Table 4 (R band), and Table 5 (I band) and are presented in Fig. 2 (V band) and in Fig. 3 (R band). The final light curves contain a total of 4 data points in the B band, 29 – in the V band, 43 – in the R band, and 6 – in the I band. The Universal Time is taken at the middle of each (B)V R(I) observing set; Julian Days are geocentric. The telescopes used are abbreviated in a self-explanatory way in the tables. The suffix FR used in the tables means that focal reducer has been employed.

Note that due to the small number of BI data points the computed throughout the paper statistical parameters of the blazar and control star BI light curves are approximate and should be used with care.

4 Discussion

4.1 Accuracy of the photometry

The mean BV RI magnitudes of the control star are 16.090, 15.272, 14.761, and 14.355, respectively. These magnitudes

Fig. 3 The same as in Fig. 2, but for the R band.

Fig. 4 Colour index V − R plotted against the R magnitude. One can see that 3C 345 is redder when it is brighter; a weighted linear fit is overplotted. Note that for higher fluxes the colour index seems to be less dependent on the R magnitude.

are in good agreement with those presented in Table 1. Consequently, the systematic errors introduced due to the colour term skipping in magnitude calculation are rather negligible.

The standard deviations of the control star BV RI light curves are 0.014 mag, 0.033 mag, 0.031 mag, and 0.013 mag, respectively. We found that the standard deviations of the V R bands are larger than the mean formal errors of the calibrated 3C 345 V R magnitudes by factors of 2.7 and 2.1,

www.an-journal.org © . . . WILEY-VCH Verlag GmbH & Co. KGaA, Weinheim

Fig. 5 Intra-night V light curves for three consecutive nights in 2001 August. Filled squares are the blazar magnitudes and filled circles – star #4 ones. No significant intranight variability could be identified.

respectively. Based on the scatter of the control star magnitudes, we conclude that the accuracy of our V R photometry is not better than 0.03 mag; actually, the accuracy should be worse because control star #4 was brighter than the blazar during the monitoring period.

4.2 V − R colour index

The V − R colour index dependence on the R magnitude is plotted in Fig. 4. Using a weighted linear fit in the interval of the R magnitudes fainter than R_0 = 15.5 mag, we got the following anti-correlation

V − R = (2.242 ± 0.226) − (0.114 ± 0.014)R,

with a correlation coefficient r = −0.718, i.e. during the brighter stages 3C 345 becomes redder. The cut-off magnitude R_0 was introduced by us as the dependence of the colour index on the flux seems to be less pronounced for brighter stages of the source (see Fig. 4). The value of R_0 was determined by eye and should be considered as approximate because the region where the “colour index – magnitude” relation changes its slope is not well covered with data points. Schramm’s et al. (1993a) Fig. 4 could be regarded as a support in favour of the cut-off magnitude introduction. However, the presence of a cut-off magnitude is not so obvious inspecting Zhang’s et al. (2000) “colour index – magnitude” figures.

Fitting over the entire range of magnitudes, we got

V − R = (1.762 ± 0.179) − (0.085 ± 0.011)R,

Fig. 6 The same as in Fig. 5, but for the R band.

with a correlation coefficient r = −0.734. In this case the fitted coefficients are in good agreement with those obtained by Schramm et al. (1993a) who used 1991/92 data and by Zhang et al. (2000) who used 1991/92 and 1996/97 data.

4.3 Intra-night variability

The V RI intra-night monitoring light curves are presented in Fig. 5, Fig. 6, and Fig. 7, respectively. No significant intra-night variability patterns or gradients could be identified by eye. To quantify the intra-night variability of 3C 345 we used the variability parameter C proposed by Jang & Miller (1997). Given the standard deviations of the blazar and of the control star light curves, σ(3C 345) and σ(star #4), respectively, the variability parameter is defined as C = σ(3C 345) σ(star #4) . If C > C_0 (C_0 = 2.576), then the source is considered variable at the 99% confidence level. Note that for the period of the intra-night monitoring the blazar and the control star were of compatible brightness; so, the parameter C cannot be a subject to significant systematic errors due to the different flux densities of the objects considered. A further complication of the above simple criterion for variability could be considered when multi-colour observations are available: one could expect correlated variations in different passbands to be observed, i.e. the median value of C over all passbands for a given night to be larger than C_0. The criterion C > C_0 was met in the first night (C = 2.7 in the R band) and in the third night (C = 2.9 in the V band) of

Fig. 7 The same as in Fig. 5, but for the I band.

the intra-night monitoring. However, the computed median values of C over the V RI bands are 1.6, 1.0, and 2.1 for the consecutive nights, respectively. So, we could conclude that for the period of the intra-night monitoring 3C 345 did not show significant intra-night variations.

The gradients of the V R long-term light curves for the period 2001 July/August, i.e. around the dates of the intranight monitoring, are −0.32 ± 0.07 and −0.29 ± 0.06 mag per year, respectively; the weight-mean magnitudes computed for the nights of intra-night monitoring were also included in the gradient calculation. The gradients were estimated using a weighted linear fit to the 2001 July/August V R data points; this part of the light curves and the corresponding fits are presented in Fig. 8. The standard deviations of the V R long-term light curves for the period 2001 July/August are 0.026 and 0.023 mag, respectively; the same data points were used as in the gradient calculation. Therefore, 3C 345 did not show significant flux changes over timescales of weeks around the period of the intranight monitoring^1. This result is in agreement with H04’s conclusion that the presence of intra-night variability occurs more frequently while the flux is changing. We observed no evident intra-night variability while the source was in a bright stage. This supports H04’s finding of no correlation between the presence/absence of intra-night variability and the flux level of sources; the intra-night variability observa-

1 One could see that 2001 July/August part of the long-term light curves is not well sampled; so, our conclusion should be used with some caution: its truthfulness depends on the blazar behaviour during the gaps in our monitoring.

Fig. 8 V R light curves of 3C 345 for the period 2001 July/August. The weighted linear fits used to estimate the light curve gradients are overplotted.

tions used by H04 were performed when 3C 345 was fainter compared to the period of our intra-night observations.

4.4 Long-term variability

One could see from Fig. 2 and Fig. 3 that 3C 345 was in a bright stage during 1998/99 and 2001, i.e. the blazar showed periods of flaring activity. In particular, a maximum in 3C 345 brightness was detected in 2001 February: 15.345 mag in the V band and 14.944 mag in the R one – values compatible with the 1991/92 outburst ones (see Schramm et al. 1993a). Another flare of brightness could be seen at the end of July 2006. Unfortunately, our measurements are too sparse to be able to follow the individual flares accurately.

The total amplitude of variability detected by us for the period 1996 – 2006 is 1.40 mag in the B band, 2.06 mag in the V band, 2.25 mag in the R band and 1.00 mag in the I band; one should keep in mind the very different sampling of BI and V R light curves.

The high brightness level observed during 2001 is in agreement with Zhang’s et al. (1998) prediction that the following large outburst of 3C 345 should be at its maximum around 2002 January. This prediction was made on the basis of the period of 10.1 ± 0.8 years found by them.

5 Summary

We have presented the results of the blazar 3C 345 monitoring in Johnson-Cousins BV RI bands for the period 1996 – 2006. The total amplitude of variability obtained out of our data is 2.06 mag in the V band and 2.25 mag in the R one. 3C 345 showed periods of flaring activity during 1998/99 and 2001: a maximum of the blazar brightness was detected in 2001 February – 15.345 mag in the V band and 14.944 mag in the R one. The intra-night monitoring of 3C 345 in three consecutive nights in 2001 August did not reveal significant intra-night variability.

www.an-journal.org © . . . WILEY-VCH Verlag GmbH & Co. KGaA, Weinheim

Table 2 B band light curves of the blazar 3C 345 and of control star #4.

Civil date UT JD − 2400000 B (3C 345) B (star #4) Telescope

1997 Jul 05 22:39 50635.4438 17.327 ± 0.017 16.077 ± 0.017 ROZ2.0 2001 May 07 22:36 52037.4417 16.075 ± 0.018 16.096 ± 0.018 SKI1.3 2001 May 08 00:18 52037.5122 16.078 ± 0.017 16.106 ± 0.017 SKI1.3 2006 Jul 29 19:14 53946.3012 15.928 ± 0.013 16.080 ± 0.017 ROZ2.0

Table 3 V band light curves of the blazar 3C 345 and of control star #4.

Civil date UT JD − 2400000 V (3C 345) V (star #4) Telescope

1997 Jun 03 01:07 50602.5464 17.401 ± 0.007 15.272 ± 0.006 ROZ2.0 1997 Jul 05 22:39 50635.4438 17.235 ± 0.008 15.269 ± 0.006 ROZ2.0 1998 Jun 17 00:23 50981.5162 16.747 ± 0.025 15.218 ± 0.010 BEL0.6 1998 Jun 23 22:59 50988.4578 16.238 ± 0.009 15.238 ± 0.007 ROZ2.0 1998 Jul 20 22:00 51015.4168 16.196 ± 0.006 15.235 ± 0.006 ROZ2.0 1998 Aug 20 20:31 51046.3545 16.041 ± 0.006 15.274 ± 0.006 ROZ2.0 1998 Aug 23 20:05 51049.3368 16.242 ± 0.007 15.260 ± 0.007 ROZ2.0 1999 Apr 19 00:27 51287.5188 15.796 ± 0.009 15.275 ± 0.020 ROZ2.0 1999 Apr 20 01:54 51288.5795 15.742 ± 0.004 15.273 ± 0.004 ROZ2.0 1999 Jul 06 22:52 51366.4527 16.620 ± 0.019 15.243 ± 0.009 BEL0.6 2000 Jun 03 22:05 51699.4201 16.343 ± 0.020 15.268 ± 0.012 BEL0.6FR 2000 Jun 04 21:50 51700.4097 16.352 ± 0.017 15.243 ± 0.010 BEL0.6FR 2001 Feb 17 01:53 51957.5784 15.345 ± 0.009 15.235 ± 0.010 ROZ0.5/0.7 2001 Mar 24 22:22 51993.4318 15.773 ± 0.003 15.352 ± 0.003 ROZ2.0FR 2001 May 07 22:36 52037.4417 15.730 ± 0.008 15.334 ± 0.008 SKI1.3 2001 May 20 01:16 52049.5528 15.538 ± 0.006 15.233 ± 0.006 SKI1.3 2001 May 25 00:16 52054.5115 15.630 ± 0.006 15.290 ± 0.006 SKI1.3 2001 May 27 21:26 52057.3933 15.552 ± 0.008 15.269 ± 0.010 ROZ0.5/0.7 2001 Jul 04 23:37 52095.4844 15.726 ± 0.006 15.285 ± 0.006 SKI1.3 2001 Jul 06 19:49 52097.3260 15.722 ± 0.006 15.286 ± 0.006 SKI1.3 2001 Aug 06 22:46 52128.4490 15.687 ± 0.006 15.303 ± 0.006 SKI1.3 2001 Aug 19 01:08 52140.5469 15.730 ± 0.018 15.299 ± 0.012 BEL0.6 2001 Aug 20 00:22 52141.5156 15.677 ± 0.015 15.293 ± 0.017 BEL0.6 2001 Aug 21 00:39 52142.5273 15.675 ± 0.021 15.283 ± 0.010 BEL0.6 2002 Mar 05 23:31 52339.4796 16.392 ± 0.003 15.271 ± 0.003 ROZ2.0FR 2003 May 02 21:12 52762.3837 16.606 ± 0.019 15.240 ± 0.025 ROZ0.5/0.7 2003 May 05 21:16 52765.3858 16.648 ± 0.015 15.220 ± 0.011 ROZ0.5/0.7 2005 Mar 12 23:58 53442.4989 17.072 ± 0.004 15.301 ± 0.003 ROZ2.0 2006 Jul 29 19:14 53946.3012 15.604 ± 0.005 15.313 ± 0.005 ROZ2.0

Our measurements should be considered as a part of the international efforts aimed to obtain a dense temporal coverage of the light curve of 3C 345. The availability of well sampled multi-frequency light curves is of importance to reveal the source of the blazar activity (e.g. Schramm et al. 1993a; Lobanov & Roland 2005).

The tabulated long-term BV RI and intra-night V RI light curves of 3C 345 and of star #4 could be found at www.astro.bas.bg/∼bmihov.

Acknowledgements. The authors are thankful to the anonymous referee whose constructive suggestions and criticism helped us to improve this paper.

The authors are thankful to Prof. Y. Papamastorakis and I. Papadakis for the telescope time at Skinakas Observatory.

The European Southern Observatory Munich Image Data Analysis System (ESO-MIDAS) is developed and maintained by the European Southern Observatory.

The design and manufacturing of the the Focal Reducer Rozhen (FoReRo) were performed in the workshop of the Institute of Astronomy, Bulgarian Academy of Sciences, with financial support by the Ministry of Education and Science, Bulgaria (contract F- 482/2201).

The SBIG ST-8 model CCD camera at the Belogradchik Astronomical Observatory is provided by the Alexander von Humboldt Foundation, Germany.

We also acknowledge the support by UNESCO-ROSTE for the regional collaboration.

Table 4 R band light curves of the blazar 3C 345 and of control star #4.

Civil date UT JD − 2400000 R (3C 345) R (star #4) Telescope

1996 Aug 12 23:08 50308.4637 17.195 ± 0.020 . . . ROZ2.0 1997 Jun 01 22:48 50601.4500 17.121 ± 0.007 14.790 ± 0.006 ROZ2.0 1997 Jun 03 01:07 50602.5464 17.131 ± 0.007 14.786 ± 0.006 ROZ2.0 1997 Jul 05 22:39 50635.4438 16.924 ± 0.006 14.808 ± 0.006 ROZ2.0 1997 Jul 06 21:27 50636.3934 16.987 ± 0.007 14.767 ± 0.006 ROZ2.0 1997 Jul 10 19:17 50640.3032 16.851 ± 0.007 14.768 ± 0.006 ROZ2.0 1997 Aug 03 23:14 50664.4680 16.830 ± 0.043 14.730 ± 0.011 BEL0.6 1997 Aug 04 21:31 50665.3965 16.946 ± 0.028 14.723 ± 0.008 BEL0.6 1997 Aug 07 22:44 50668.4474 16.862 ± 0.033 14.733 ± 0.009 BEL0.6 1997 Sep 07 19:42 50699.3210 16.494 ± 0.006 14.728 ± 0.006 ROZ2.0 1997 Sep 10 19:42 50702.3212 16.394 ± 0.009 14.703 ± 0.006 ROZ2.0 1997 Sep 28 18:10 50720.2567 16.572 ± 0.014 14.738 ± 0.007 BEL0.6 1997 Sep 29 18:27 50721.2690 16.557 ± 0.016 14.752 ± 0.007 BEL0.6 1998 Mar 04 01:09 50876.5479 16.675 ± 0.006 14.723 ± 0.006 ROZ2.0 1998 May 28 23:43 50962.4882 15.531 ± 0.010 14.832 ± 0.008 BEL0.6FR 1998 Jun 17 00:23 50981.5162 16.319 ± 0.023 14.712 ± 0.010 BEL0.6 1998 Jun 23 22:59 50988.4578 15.794 ± 0.012 14.727 ± 0.009 ROZ2.0 1998 Jul 20 22:00 51015.4168 15.724 ± 0.006 14.739 ± 0.006 ROZ2.0 1998 Aug 20 20:31 51046.3545 15.576 ± 0.006 14.785 ± 0.006 ROZ2.0 1998 Aug 23 20:05 51049.3368 15.792 ± 0.007 14.765 ± 0.006 ROZ2.0 1999 Apr 19 00:27 51287.5188 15.363 ± 0.008 14.774 ± 0.022 ROZ2.0 1999 Apr 20 01:54 51288.5795 15.297 ± 0.004 14.748 ± 0.005 ROZ2.0 1999 Jul 06 22:52 51366.4527 16.203 ± 0.017 14.775 ± 0.009 BEL0.6 2000 Jun 03 22:05 51699.4201 16.021 ± 0.015 14.777 ± 0.009 BEL0.6FR 2000 Jun 04 21:50 51700.4097 16.048 ± 0.016 14.768 ± 0.009 BEL0.6FR 2001 Feb 17 01:53 51957.5784 14.944 ± 0.013 14.730 ± 0.020 ROZ0.5/0.7 2001 Mar 24 22:22 51993.4318 15.267 ± 0.003 14.762 ± 0.003 ROZ2.0FR 2001 May 07 22:36 52037.4417 15.246 ± 0.008 14.759 ± 0.007 SKI1.3 2001 May 20 01:16 52049.5528 15.129 ± 0.006 14.732 ± 0.006 SKI1.3 2001 May 27 21:26 52057.3933 15.151 ± 0.011 14.751 ± 0.006 ROZ0.5/0.7 2001 Jun 05 23:27 52066.4771 15.182 ± 0.006 14.768 ± 0.006 SKI1.3 2001 Jun 19 20:40 52080.3608 15.179 ± 0.006 14.773 ± 0.006 SKI1.3 2001 Jul 04 23:38 52095.4844 15.274 ± 0.006 14.763 ± 0.006 SKI1.3 2001 Jul 06 19:50 52097.3260 15.277 ± 0.006 14.779 ± 0.006 SKI1.3 2001 Aug 06 22:46 52128.4490 15.245 ± 0.006 14.792 ± 0.006 SKI1.3 2001 Aug 19 01:08 52140.5469 15.221 ± 0.029 14.769 ± 0.010 BEL0.6 2001 Aug 20 00:22 52141.5156 15.246 ± 0.012 14.775 ± 0.008 BEL0.6 2001 Aug 21 00:39 52142.5273 15.228 ± 0.010 14.767 ± 0.007 BEL0.6 2002 Mar 05 23:31 52339.4796 15.992 ± 0.003 14.767 ± 0.003 ROZ2.0FR 2003 May 02 21:12 52762.3837 16.352 ± 0.023 14.735 ± 0.021 ROZ0.5/0.7 2003 May 05 21:16 52765.3858 16.295 ± 0.017 14.733 ± 0.013 ROZ0.5/0.7 2005 Mar 12 23:58 53442.4989 16.729 ± 0.004 14.845 ± 0.003 ROZ2.0 2006 Jul 29 19:14 53946.3012 15.147 ± 0.004 14.823 ± 0.009 ROZ2.0

References

Angel, J. R. P., Stockman, H. S.: 1980, ARA&A 18, 321 Borgeest, U., Schramm, K.-J.: 1994, A&A 284, 764 González-Pérez, J. N., Kidger, M. R., Martín-Luis, F.: 2001,

AJ 122, 2055 Howard, E. S., Webb, J. R., Pollock, J. T., Stencel, R. E.: 2004,

AJ 127, 17 (H04) Jang, M., Miller, H. R.: 1997, AJ 114, 565 Kidger, M. R.: 1989, A&A 226, 9 Kidger, M. R., de Diego, J. A.: 1990, A&A 227, 25L Lobanov, A. P., Roland, J.: 2005, A&A 431, 831

Otterbein, K., Krichbaum, T. P., Kraus, A., Lobanov, A. P., Witzel, A., Wagner, S. J., Zensus, J. A.: 1998, A&A 334, 489 Schramm, K.-J., Borgeest, U., Camenzind, M., et al.: 1993a, A&A 278, 391 Schramm, K. J., Borgeest, U.: 1993b, in Proc. 31st Liége Int. Astrophys. Colloq. “Gravitational Lenses in the Universe”, eds. J. Surdej et al. (Liége: Univ. Liége, Inst. d’Astrophys.), 161 Schramm, K.-J., Borgeest, U., Kühl, D., von Linde, J., Linnert, M.

D.: 1994a, A&AS 104, 473 Schramm, K.-J., Borgeest, U., Kühl, D., von Linde, J., Linnert, M.

D., Schramm, T.: 1994b, A&AS 106, 349

www.an-journal.org © . . . WILEY-VCH Verlag GmbH & Co. KGaA, Weinheim

Table 5 I band light curves of the blazar 3C 345 and of control star #4.

Civil date UT JD − 2400000 I (3C 345) I (star #4) Telescope

2000 Jun 04 21:50 51700.4097 15.548 ± 0.018 14.364 ± 0.015 BEL0.6FR 2001 May 07 22:36 52037.4417 14.704 ± 0.015 14.361 ± 0.015 SKI1.3 2001 Aug 19 01:08 52140.5469 14.668 ± 0.006 14.361 ± 0.007 BEL0.6 2001 Aug 20 00:22 52141.5156 14.650 ± 0.007 14.335 ± 0.006 BEL0.6 2001 Aug 21 00:39 52142.5273 14.650 ± 0.010 14.343 ± 0.006 BEL0.6 2006 Jul 29 19:14 53946.3012 14.547 ± 0.010 14.368 ± 0.010 ROZ2.0

Schramm, K.-J., Bian, Y. L., Borgeest, U., Swings, J. P.: 1994c, Publ. Beijing Astron. Obs. 25, 1 Smith, P. S., Balonek, T. J., Heckert, P. A., Elston, R., Schmidt, G.

D.: 1985, AJ 90, 1184 Stetson, P. B.: 1987, PASP 99, 191 Villata, M., Raiteri, C. M., Balonek, T. J., et al.: 2006, A&A 453, 817 Wagner, S. J., Camenzind, M., Dreissigacker, O., et al.: 1995, A&A 298, 688 Zhang, X., Xie, G. Z., Bai, J. M.: 1998, A&A 330, 469 Zhang, X., Xie, G. Z., Bai, J. M., Zhao, G.: 2000, Ap&SS 271, 1