arXiv:0712.0384v2 [astro-ph] 8 May 2008

Mon. Not. R. Astron. Soc. 000, 1–17 (2008) Printed 11 November 2018 (MN L^ATEX style file v2.2)

Initial Data Release from the INT Photometric Hα Survey of the Northern Galactic Plane (IPHAS)

E. A. González-Solares^{1⋆}, N. A. Walton^1, R. Greimel^{2,3}, J. E. Drew^{4,5}, M. J. Irwin^1, S. E. Sale^4, K. Andrews^6, A. Aungwerojwit^{7,8}, M. J. Barlow^9, E. van den Besselaar^{10}, R. L. M. Corradi^{2,11}, B. T. Gänsicke^7, P. J. Groot^{10}, A. S. Hales^{9,12}, E. C. Hopewell^4, H. Hu^{10}, J. Irwin^{1,13}, C. Knigge^{14}, E. Lagadec^{15}, P. Leisy^{2,11}, J. R. Lewis^1, A. Mampaso^{11}, M. Matsuura^{15}, B. Moont^4, L. Morales-Rueda^{10}, R. A. H. Morris^{16}, T. Naylor^{17}, Q. A. Parker^{18,19}, P. Prema^1, S. Pyrzas^7, G. T. Rixon^1, P. Rodríguez-Gil^{7,11}, G. Roelofs^{10,13}, L. Sabin^{15}, I. Skillen^2, J. Suso^{20}, R. Tata^{21}, K. Viironen^{11}, J. S. Vink^{22}, A. Witham^{14}, N. J. Wright^9, A. A. Zijlstra^{15}, A. Zurita^{23}, J. Drake^{13}, J. Fabregat^{20}, D. J. Lennon^{2,11}, P. W. Lucas^5, E. L. Martín^{11,21}, S. Phillipps^{16}, D. Steeghs^{7,13}, Y. C. Unruh^4

1 Institute of Astronomy, Madingley Road, Cambridge CB3 0HA, U.K.

2 Isaac Newton Group of Telescopes, Apartado de correos 321, E38700 Santa Cruz de La Palma, Tenerife, Spain 3 Institut für Physik, Karl-Franzen Universität Graz, Universitätsplatz 5, 8010 Graz, Austria 4 Imperial College London, Blackett Laboratory, Exhibition Road, London, SW7 2AZ 5 Centre for Astrophysics Research, University of Hertfordshire, College Lane, Hatfield AL10 9AB 6 Royal Observatory Edinburgh, Blackford Hill, Edinburgh, EH9 3HJ, U.K. 7 Department of Physics, University of Warwick, Coventry, CV4 7AL, U.K. 8 Department of Physics, Faculty of Science, Naresuan University, Phitsanulok, 65000, Thailand 9 University College London, Department of Physics & Astronomy, Gower Street, London, WC1E 6BT, U.K. 10 Department of Astrophysics/IMAPP, Radboud University Nijmegen, P.O. Box 9010, 6500 GL, Nijmegen, The Netherlands 11 Instituto de Astrofísica de Canarias, Via Láctea s/n, E38200 La Laguna, Santa Cruz de Tenerife, Spain 12 National Radio Astronomy Observatory, 520 Edgemont Road, Charlottesville, Virginia, 22903-2475, USA 13 Harvard-Smithsonian Center for Astrophysics, 60 Garden Street, Cambridge, MA 02138, U.S.A. 14 School of Physics & Astronomy, University of Southampton, Southampton, SO17 1BJ, U.K. 15 School of Physics and Astronomy, University of Manchester, Sackville Street, PO Box 88, Manchester, M60 1QD, U.K. 16 Astrophysics Group, Department of Physics, Bristol University, Tyndall Avenue, Bristol, BS8 1TL, U.K. 17 School of Physics, University of Exeter, Stocker Road, Exeter, EX4 4QL, U.K. 18 Department of Physics, Macquarie University, NSW 2109, Australia 19 Anglo-Australian Observatory, PO Box 296, Epping NSW 1710, Australia 20 Observatorio Astronómico de Valencia, Universidad de Valencia, 46071 Paterna-Valencia, Spain 21 Physics Department, University of Central Florida, Orlando, FL 32816, U.S.A 22 Armagh Observatory, College Hill, Armagh BT61 9DG, Northern Ireland 23 Departamento de Física Teorica y del Cosmos, Facultad de Ciencias, Av. Fuentenueva s/n, E18071 Granada, Spain

Received .................; Accepted ................

ABSTRACT The INT/WFC Photometric Hα Survey of the Northern Galactic Plane (IPHAS) is an imaging survey being carried out in Hα, r^′ and i^′ filters, with the Wide Field Camera (WFC) on the 2.5-metre Isaac Newton Telescope (INT) to a depth of r^′ =20 (10σ). The survey is aimed at revealing the large scale organisation of the Milky Way and can be applied to identifying a range of stellar populations within it. Mapping emission line objects enables a particular focus on objects in the young and old stages of stellar evolution ranging from early T-Tauri stars to late planetary nebulae. In this paper we present the IPHAS Initial Data Release, primarily a photometric catalogue of about 200 million unique objects, coupled with associated image data covering about 1,600 square degrees in three passbands. We note how access to the primary data products has been implemented through use of standard virtual observatory publishing interfaces. Simple traditional web access is provided to the main IPHAS photometric catalogue, in addition to a number of common catalogues (such as 2MASS) which are of immediate relevance. Access through the AstroGrid VO Desktop opens up the full range of analysis options, and allows full integration with the wider range of data and services available through the Virtual Observatory. The IDR represents the largest dataset published primarily through VO interfaces to date, and so stands as an examplar of the future of survey data mining. Examples of data access are given, including a cross-matching of IPHAS photometry with sources in the UKIDSS Galactic Plane Survey that validates the existing calibration of the best data. Key words: surveys – catalogues – stars: emission line – Galaxy: stellar content

© 2008 RAS

2 González-Solares et al.

1 INTRODUCTION

The INT Photometric Hα Survey of the Northern Galactic Plane (IPHAS) is a 1800 deg^2 CCD survey of the northern Milky Way (|b| < 5^∘) using the r^′, i^′ and Hα passbands (table 1) down to r^′ = 20 (Vega, 10σ for a point-like source in an aperture of 1.2 arcsec). The execution of IPHAS, the properties of its characteristic colour-colour plane, and the likely scientific scope of the survey were discussed by Drew et al. (2005)

This paper describes the Initial Data Release (IDR) of the IPHAS survey, containing observations for about 200 million objects and comprising 2.4 Tb of processed imaging data. The survey is being carried out using the Wide Field Camera (WFC) on the INT telescope. The WFC consists of four 2048x4096 pixel CCDs with a pixel scale of 0.33 arcsec and a field of view of 0.29 square degrees. The camera CCD detectors are configured in an L-shape and CCD number 3 is slightly vignetted in one corner.

The data have already been used to carry out a series of investigations: the interaction between the planetary nebula Sh2-188 and the inter-stellar medium (Wareing et al. 2006); the discovery of a new quadrupolar nebula (Mampaso et al. 2006); the study of the properties of a sample of cataclysmic variables (Witham et al. 2006); the interaction of the jet of Cygnus X-1 with the surrounding medium (Russell et al. 2007); brown dwarf searches (Martín et al. 2008, submitted); detection of nova progenitors (Steeghs et al. 2007, 2006); the study of the properties of symbiotic stars and first discoveries (Corradi et al. 2007), the study of young pre-main sequence stars in CygOB2 (Vink et al. 2008, submitted), the presentation of a sample of about 5000 Hα emitting stars (Witham et al. 2008) and the description of a method for selecting A stars and exploiting them to estimate distances and reddening (Drew et al. 2008). Several other investigations are on-going and we hope the data release described here will lead to many data mining programs by the community.

In addition to the optical data provided by IPHAS, the Galactic Plane Survey (GPS; Lucas et al. 2007) of the UKIDSS (Dye et al. 2006) is also observing a similar area in J, H and K. This will be followed in the next few years by a survey of the southern Galactic Plane, VPHAS+, on the VLT Survey Telescope (VST) using OmegaCam (Kuijken et al. 2004). It serves as a digital successor to the UK Schmidt Hα Survey (Parker et al. 2005) and will reach about 2 magnitudes deeper. The UVEX project is targeting the same area in the U and g bands. The Herschel observatory (Pilbratt 2005) will also target the Galactic Plane. Together, these surveys will provide a better understanding of the stellar content and properties of our Galaxy.

The aim of this paper is to provide a guide to the Initial Data Release of the IPHAS survey, describe the data products and the data properties and usage. Section 2 summarises the observations, sky coverage and data quality. The data processing is briefly described in section 3. The data products contained in this release are described in section 4. Section 5 shows an example usage of the catalogue to extract sources detected in a large area of sky and cross match with the GPS survey. Finally in section 6 we describe the different user access interfaces to the data.

Filter Cen Wave (Å) Width (Å) AB (mag)

r^′ 6254.1 1350.0 0.164 Hα 6568.3 96.0 0.352 i^′ 7771.9 1490.0 0.413

Table 1. Filter parameters. The second column lists the effective wavelength of the filter and the third its width. The last column lists the value to be added to the Vega magnitude to convert it to AB. Filter profiles are available from the ING web site (www.ing.iac.es) and discussed in Drew et al. 2005.

2 SKY COVERAGE AND DATA QUALITY

The IDR contains 1,600 deg^2 of imaging data in three bands covering the northern galactic plane at latitudes |b| < 5^∘ and longitudes 30^o ∼< ℓ ∼< 220^o . Figure 1 shows the distribution in the sky. The data have been obtained between August 2003 and December 2005 during a total of 212 nights (about 26 per cent of this observing time has been completely lost due to bad weather).

The area to be observed has been divided into “fields” each of them corresponding to the coverage of the WFC. Fields have been defined in a diagonal rather than rectangular geometry in order to take advantage of the L-shape of the detector configuration allowing for a 5 per cent overlap between adjacent pointings. Figure 2 provides an example of the observation configuration.

Gaps between detectors are typically 20^{′′}. Therefore the area not observed in each pointing due to the gaps is about 12 square arcmin (i.e. ∼1 per cent). In order to cover the chip gaps and bad columns each “field” is observed in pairs which are referred to as “on” and “off” positions with an offset of 5^′W and 5^′S between the pointings. Most of the objects are thus observed twice. Field pairs are observed consecutively in the three bands before moving to the next field pair in order to minimize the effects of photometric variability. Fields with mean stellar seeing values larger than 2 arcsec, ellipticity larger than 0.2, r^′-band sky counts larger than 2000 ADUs (which indicates observations too close to the moon or with clouds such that sensitivity is reduced to a significantly lower magnitude limit) or anomalous star ratios between the filters (which indicates variable clouds during observations) are scheduled for re-observation in the three filters. Each field pair is assigned an identification which we will refer to as “Field number”. The average stellar counts is ∼20,000 per square degree although this value is highly dependent on the position along the Galactic plane as seen in figure 3 which shows the number of sources detected in each field as a function of Galactic longitude.

The overall survey properties and quality of the data is summarised in table 2. The exposure time for each filter is 30 s in r^′ (except in the first year of observations, 2003, when it was 10 s), 10 s in i^′ and 120 s in Hα. All data obtained up to December 2005 have been included in the IDR regardless of seeing or photometric conditions. Figure 4 shows the seeing values for these data in the r^′ band. Although the mean value is about 1.26 arcsec (and the median 1.18 arcsec) there are clearly observations obtained in poorer conditions. The maximum acceptable seeing value for the data to be accepted as final survey quality is 2 arcsec in the three bands. Data with larger seeing values have been included in this

IPHAS Initial Data Release 3

Figure 1. IPHAS Initial Data Release sky coverage in galactic coordinates (degrees). The top figure displays the coverage of the full release and the bottom one the coverage of the PhotoObjBest best observations subset. Brightness indicates the total line-of-sight reddening as computed from the Schlegel et al. (1998) dust maps using 4 pixel interpolation.

Figure 2. Tiling configuration of 3×3 pointings covering an area of ∼2 square degrees. Chips are outlined in black. Field numbers are also shown. An additional pattern with an offset of 5^′ × 5^′ is not included in order to make the figure clearer.

Figure 3. Source counts as a function of Galactic longitude (one data point per IPHAS field).

release but they do not appear by default to the user. For this purpose we are releasing a full catalogue, PhotoObj, with all the observations obtained and a PhotoObjBest subset which only contains the observations which pass our scientific criteria for this release (see section 4.2 for more details). As noted in table 2 the coverage of this latter catalogue is about 1,000 square degrees and contains about 90 million unique objects. The Final Data Release of the data

4 González-Solares et al.

Figure 4. Seeing distribution in the r^′ band for the whole IDR. One of the criteria for inclusion in the PhotoObjBest catalogue is that objects have to be observed with seeing conditions better than 2.0 in the three bands (left of the dashed line).

Figure 5. Magnitude limit distribution for the IDR in the three survey bands. The r^′ band distribution has been split in two, the leftmost corresponding to the 2003 observations and the rightmost corresponding to post-2003 observations in which the exposure time was increased from 10 s to 30 s.

will extend the defined scientific criteria to the whole 1,800 square degrees. Figure 5 shows the magnitude limit (5σ) for all the objects in the three survey bands. Note that r^′ observations obtained in 2003 are shallower due to the smaller integration time used.

3 DATA PROCESSING

All the observations obtained with the INT telescope at La Palma are transmitted in pseudo-real time to the Cambridge Astronomy Survey Unit (CASU) for data archival via the internet. Although quasi real time data processing is possible it is preferable to perform the data processing on a run by run basis. The calibration is then performed using the whole run master flats and biases. For each observation the data are stored in a Multi-Extension Fits file (MEF) with a primary header describing the overall characteristics of the observation (pointing, filter, exposure time, ...) and four image extensions corresponding to each of the CCD detectors.

The data are processed by CASU as described in Irwin and Lewis (2001) following the same steps as for the processing of the Wide Field Survey (Irwin et al. 2005; McMahon et al. 2001) which used the same telescope and camera combination. We provide here a short description of the reduction steps; additional details are available from Drew et al. (2005).

The data are first debiassed (full 2D bias removal is necessary). Bad pixels and columns are then flagged and recorded in confidence maps, which are used during catalogue generation. Linearity tests using sequences of dome flats revealed that the CCDs have significant non-linearities at the level of 1 to 2 per cent depending on the detector and period of observation. Due to several changes to the WFC controllers the linearity values change from time to time so linearity measurements are updated periodically. A linearity correction using look-up-tables is then applied to all data. Flatfield images in each band are constructed by combining a series of sky flats obtained in bright sky conditions during the twilight for each run.

The standard catalogue generation software (Irwin 1985) makes direct use of the confidence maps previously generated (described in 4.1.1) for a variety of tasks. These include object detection and parametrization, producing quality control information, standard object descriptors and detected object overlay files. The possibly varying sky background is estimated automatically, prior to object detection, using a combination of robust iteratively clipped estimators. The image catalogues are then further processed to yield morphological classification for detected objects and used to generate astrometric and photometric calibration information.

Each detected object has an attached set of descriptors, forming the columns of the binary table and summarising derived position, shape and intensity information. During further processing stages ancillary information such as the sky properties, seeing and mean stellar image ellipticity, are derived from the catalogues and stored in the FITS headers attached to each catalogue extension. In addition to being the primary astronomical products from the pipeline processing, the catalogues and associated derived summary information form the basis for astrometric and photometric calibration and quality control monitoring.

Finally an astrometric solution starts with a rough World Coordinate System (WCS) based on the known telescope and camera geometry and is then progressively refined using the 2MASS catalogue. The WFC field distortion is modelled using a zenithal equidistant projection with polynomial radial distortion (ZPN; Greisen and Calabretta 2002). The resulting internal astrometric precision is better than 100 mas over the whole WFC array (based on intercomparison of overlap regions; see section 3.3). The object detection is performed in each band separately using a standard APM-style object detection and parametrization algorithm (Irwin 1985). The curve-of-growth, defined as the flux inside an aperture as a function of its radius, is calculated measuring the flux in a set of apertures of radius r/2, r, √ 2 r, 2 r, 2 √ 2 r where r = 3.5 pixels (1.2 arcsec) and an automatic aperture correction (based on the average curve-of-growth

IPHAS Initial Data Release 5

Parameter Value

Telescope 2.5m Isaac Newton Telescope, La Palma Instrument Wide Field Camera Field of view 0.29 sq. deg. (per pointing) Detector scale 0.33 arcsec/pixel Total area of survey ∼1800 sq. deg Total area in IDR ∼1,600 sq. deg Area included in the PhotoObjBest catalogue ∼1000 sq. deg Number of unique objects in the full catalogue ∼200,000,000 Number of unique objects in the PhotoObjBest catalogue ∼90,000,000 Filters r^′, i^′, Hα Exposure time 30 s (r^′)^†, 10 s (i^′), 120s (Hα) FWHM (median) 1.3” (r^′), 1.2” (i^′), 1.3” (Hα) Magnitude limit (Vega, 5σ) 21.8 (r^′), 20.2 (i^′), 20.6 (Hα) Astrometry <0.1” (based on 2MASS)

† 10 s in 2003

Table 2. Survey parameters and IDR quality summary.

for stellar images) is applied to all detected objects. Finally a distortion correction is applied to the photometry to take into account the change of scale with respect to the optical axis distance (see subsection 4.1).

It is straightforward to show that an aperture of radius ≈FWHM delivers optimal (i.e. 90 per cent of the total flux) photometry compared to more detailed PSF fitting (Naylor 1998) in non crowded areas. The default photometry is then done in an aperture of 1.2” and corrected for light loses outside the aperture. After adding some extra refinements to deal with the most crowded regions we find that there is little to be gained from PSF fitting (Irwin et al. 2008, in prep). The difference between crowded and non crowded areas is shown in figure 6 which represents the nearest neighbour source distribution for two different fields: one with high source density to illustrate the worst case scenario of a crowded field and another with an average source density. For comparison we use the nearest neighbour probability density distribution (PDF) expected for a random sample which can be written as (Bahcall and Soneira 1981) PNN (θ) = 2 π ρ θ e^{−πρθ2} (1) where ρ is the average density and πρθ^2 is the number of neighbours in the interval (0, πθ^2). The expected mean nearest neighbour separation can then be calculated as (Scott and Tout 1989) ⟨ θ ⟩ = ∫_∞ 0 θ PNN (θ) dθ = 1 2 √ ρ (2) For the space densities of the fields plotted in figure 6 we obtain ⟨ θ ⟩ = 2.5” for the crowded field and ⟨ θ ⟩ = 4.7” for the average density field. The maximum of the PNN distribution is given by θm = 1/ √ 2πρ and corresponds to θm = 2.0” and θm = 3.8” in the crowded and average density fields respectively. The large discrepancy between the random and observed distributions for the high density field at θ > 2” is due to missing close pairs which produces an overestimation of the nearest neighbours at θ ≃ 2”. We can calculate the fraction of missed objects due to crowding using the following expression (Irwin and Trimble 1984)

ρcorr = − log(1 − 4πρ θ^2_{F W HM} ) 4π θ^2_{F W HM} (3) where ρcorr is the corrected average density and θF W HM the FWHM of the images(i.e. 1.2 arcsec). For the average density field the fraction of sources lost due to close pairs is 9 per cent while in the crowded field this percentage increases to 41 per cent. Note as well that non resolved objects pair, on average, with objects at a distance ∼ ⟨ θ ⟩ occupying, and overestimating, the central bins of the nearest neighbour distribution (figure 6 top). We also plot in figure 6 the corrected nearest neighbour PDF as a dotted line using the corrected average density given by equation 3.

Note that the crowded field case represents a extreme case which has source density more than three times higher than the median source density of the survey.

The values obtained for the mean nearest neighbour separations are clearly well above our seeing values in both cases indicating that aperture photometry is appropriate for our case.

3.1 Morphological Classification

The morphological classification is based primarily on the aperture fluxes and the discrete curve-of-growth for each detected object defined by them. Ancilliary information such as object ellipticity derived from intensity-weighted second moments is also used but only as a secondary indicator. The curve-of-growth is a direct measure of the integral of the point spread function (PSF) out to various radii and is independent of magnitude if the data are properly linearised, and if saturated images are excluded. In using this property the classifier further assumes that the effective PSF for stellar objects is constant over each detector,^1 although individual detectors are allowed to have different PSFs since all detectors, pointings and passbands are treated independently.

The average stellar locus on each detector in these parameter spaces is generally well-defined and is used as the basis for a null hypothesis stellarness test. Figure 7

1 In practice we find that the effects of the spatial variation of the PSF on the aperture fluxes at the detector level are generally negligible.

6 González-Solares et al.

Figure 6. Normalised nearest neighbour source distribution for a crowded field (top; 140 sources per arcmin^2, 146160 sources in total) and for an average source density field (bottom; 40 sources per arcmin^2; 40760 sources in total) both observed with seeing of 1.2 arcsec. The dashed line shows the distribution for a random sample (equation 1) using the observed source density while the dotted line shows the expectation when the average source density is corrected for incompleteness. Close pairs are missing due to the seeing and this is reflected in the smaller number of pairs with respect to the Poisson expectation at seeing smaller than 2 arcsec. This effect is larger in the crowded field leading to a large difference between the observed and expected normalized distributions.

shows an example of this comparing the magnitude difference recorded in two apertures (1.2 and 2.4 arcsec diameter) as a function of the derived overall magnitude and illustrates how this relates to the final classification for this frame.

In practice, the aperture with radius r = 1.2 arcsec is used as a fixed reference and also defines the internal magnitude (flux) scale. The linearity of the system implies that the position of the stellar locus for any function of the aperture fluxes is independent of magnitude (at least until images saturate). Therefore marginalising the flux ratios over magnitude yields one-dimensional distributions that can be used to greatly simplify locating the stellar locus using an iteratively clipped median. With the location estimated, the median of the absolute deviation from the median (MAD) provides a robust measure of the scatter about this locus

Figure 7. An example of how the difference in flux recorded between pairs of apertures is used to provide information for morphological classification. The stellar locus (black points) is selfdefining at a constant offset (here 0.73 magnitudes) while the spread of points about this locus, after iterative clipping, defines the average scatter of stellar objects as a function of magnitude. Grey points denote noise-like objects that lie well below the stellar locus ridge, or non-stellar or blended stellar objects which lie above the stellar population. Saturated stars form the upturned sequence brighter than 13th magnitude. The offset of the top dashed line defines the average differential aperture correction for stellar objects for this pair of apertures and in combination with other pairs of apertures defines the overall stellar curve-of-growth and hence individual stellar aperture corrections.

as a function of magnitude, at least until galaxies dominate in number. This process is repeated iteratively for each distribution, using 3-sigma clipping to remove non-stellar outliers, until satisfactory convergence is reached. After convergence the equivalent Gaussian sigma is estimated using σgauss = 1.48MAD and by this means each of the image shape descriptors (in this case flux ratios or ellipticity) can be renormalised to follow a zero-median, unit variance Gaussian-like N(0, 1) distribution.

These measures are then directly combined to form the final classification statistic. The combination (essentially a unweighted sum of the normalised signed distributions) is designed to preserve information on the “sharpness” of the object profile and is finally renormalised, as a function of magnitude, to produce the equivalent of an overall N(0, 1) classification statistic.

In practice measures derived from real images do not exactly follow Gaussian distributions. However, by combining multiple normalised distributions (with well-defined 1st and 2nd moments), the Central Limit Theorem works in our favour such that the resulting overall statistic is Gaussianlike to a reasonable approximation and hence can be used with due care as the likelihood component of a Bayesian Classification scheme, making optional use of prior knowledge.

Objects lying within 2–3σ of the stellar locus (i.e. of zero) are generally flagged as stellar images, those below – 3 to –5σ (i.e. sharper) as noise-like, and those above 2–3σ (i.e. more diffuse) as non-stellar. Although the discrete classification scheme is based on the N(0, 1) measure of stellar appearance it also has several overrides built in to attempt

IPHAS Initial Data Release 7

to make it more reliable. For example, adjustments to the boundaries at the faint-end (to cope with increased rms noise in the statistic) and at the bright-end (to cope with saturation effects) are also made, while the overall image ellipticity provides a further check.

A by-product of the curve-of-growth analysis and the classification is an estimate of the average PSF aperture correction for each detector for those apertures (up to and including 4r, which includes typically ∼99 per cent, or more, of the total stellar flux) used in deriving the classification statistic. Accurate assessment of the aperture correction to place the (stellar) fluxes on a total flux scale is a crucial component of the overall calibration. We find that this method of deriving aperture corrections contributes ⩽ ±1 per cent to the overall photometry error budget and also provides a useful first order seeing correction for non-stellar sources. Further by-products of the morphological classification process are improved estimates of the seeing and average PSF ellipticity from making better use of well-defined stellar-only sources. These parameters are required for quality control monitoring of telescope performance and “atmospheric” seeing.

3.2 Photometric Calibration

Photometric calibration is done using series of Landolt standard stars (Landolt 1992) with photometry in the SDSS system with additional stars from Stetson (2000). For each night a zero point and error estimate using the observations of all the standard fields in each filter is derived. For photometric nights the calibration over the whole mosaic has an accuracy of 1-2 per cent. For the purpose of the photometric calibration, standard star observations have been obtained each night at an interval of 2 h and have been used to calibrate the r^′ and i^′ frames. The Hα frames have been calibrated using a fixed zero-point offset of 3.14 magnitudes with respect to r^′, corresponding to the magnitude difference in r^′−Hα for Vega. This value has been calculated by convolving the HST Vega spectrum (Bohlin 2007) with the atmospheric throughput, INT optical throughput (primary mirror and field corrector), CCD efficiency and the WFC filter curves (available from the ING web pages at www.ing.iac.es) so that r^′ − Hα = 0 for Vega.

All calibration is by default corrected during pipeline processing for the mean atmospheric extinction at La Palma (0.09 in r^′ and Hα and 0.05 in i^′ per unit airmass).

During non-photometric nights, in otherwise acceptable observing conditions, we find that the derived zero point systematic errors can be up to 10 per cent or more. Although the pipeline usually successfully flags such nights as nonphotometric (see figure 8) it still leaves open the problem of what to do about tracking the varying extinction during these nights. For this Initial Data Release we have not included a global photometric solution for the whole survey. While it is possible to perform an offset to a common reference system for a small subset of the observations using overlaps, as demonstrated below in section 5, the application of such methods to the whole survey area is more complicated since one has to carefully select good reference frames and allow for variation in parameters like extinction or zero point over the whole survey period. Availability of good photometric observations to tie the solution as much as

Figure 8. Photometric zero point (ZP) versus date for two runs. The dashed lines are the expected values for a good photometric night in r^′ (red), i^′ (blue) and Hα (green). Dots represent the individual measurements for each frame. The top figure shows a good photometric run in which all the zero points are consistent with the expected values. The bottom one instead shows a variable run in which a large percentage of observations have been obtained in bad photometric conditions and therefore not included in the PhotoObjBest catalogue. These plots are used to flag problematic frames and runs.

possible is crucial. Clearly this is a major task which we are currently investigating and is best accomplished when the survey is complete. Data from non-photometric nights have been included in the release but flagged as such so that they do not appear in our PhotoObjBest catalogue. Figure 9 shows the mean magnitude rms for the objects included in this catalogue, zero point uncertainties are at the level of 2 per cent for r^′ and i^′ and 3 per cent for Hα. We also plot in figure 10 the stellar counts in the three bands along two different line of sights in the Galactic plane with different reddening.

All magnitudes quoted are in the Vega system but we give the conversion factors to the AB system in table 1.

3.3 Astrometric Calibration

Astrometric calibration is a multi-stage process and aims to provide each image, and any derived catalogues, with a World Coordinate System (WCS) to convert between pixel

8 González-Solares et al.

Figure 9. Photometric measurement uncertainties as a function of magnitude in 0.5 mag bins for all the objects included in PhotoObjBest. The vertical error bars show the rms dispersion in the mean uncertainties in each brightness bin and the horizontal lines in each panel show the SNR=10 (dotted) and SNR=5 (dashed) values.

and celestial coordinates. This happens in the pipeline in two generic stages.

An initial WCS based on knowledge of the instrument, e.g. orientation, field-scale, telescope pointing, is embedded in the FITS headers, with telescope-specific information in the primary header and detector-specific information in the secondary headers. This serves to locate each detector image to within a few to several arcsec, depending on the pointing accuracy of the telescope and model parameters. The essential information required is the RA and Dec of the pointing, a (stable) reference point on the detector grid for those coordinates (e.g. the optical axis of the instrument), the central pixel scale, the rotation of the camera, the relative orientation of each detector and the geometrical distortion of the telescope and camera optics, which defines the astrometric projection to use.

Given a rough WCS for the processed frames, a more accurate WCS can be defined using astrometric standards. We have based our calibration on the 2MASS point source catalog (Skrutskie et al. 2006) for several reasons: it is an all-sky NIR survey; it is calibrated on the International Celestial Reference System (ICRS); it provides at least 100 or more suitable standards per pointing; it is a relatively recent epoch (mid-1990s) minimising proper motion problems; the global systematics are better than 100 mas over the entire sky (Zacharias et al. 2003); and for 2MASS point sources with signal:to:noise >10:1 the rms accuracy per source is <∼ 100 mas.

By stacking the astrometric residuals from a series of independent pointings and CCD WCS solutions it is possible to assess the accuracy of the simple INT distortion model. This is illustrated in the figure 11 using the average residuals

Figure 10. Star counts along two contrasted lines of sight with star densities of ∼50,000 deg^2 and different reddening.

from a stack of a one week run. The end product of the full pipeline currently has an astrometric precision better than 100 mas over the whole array (ie. across CCDs), as determined by analysis of independently calibrated adjacent overlapping pointings.

4 DATA PRODUCTS

4.1 Images

There are two types of imaging data products: (1) object images and (2) confidence maps. At this point we do not provide stacked images from the overlapping frames. We describe each of them separately.

As stated before, each image is a MEF file containing the four CCD frames. Each CCD is photometrically and astrometrically calibrated as described in the previous section. Photometry can be extracted from the images using the following expression in the instrumental system

m = ZP − κ (X − 1) − 2.5 log_{10}(f/t) + c (4)

where m is the calibrated magnitude, ZP is the zero point at unit airmass as extracted from the image headers, κ is the extinction coefficient, X is the airmass, f is the flux in counts and t is the exposure time. The c correction is based

IPHAS Initial Data Release 9

Figure 11. Astrometric residuals derived from a series of independent WFC pointings. The residuals are shown in physical coordinates with respect to the center of the optical axis.

on the median dark sky recorded in science frames compared to the median for all the CCDs and as such is an ancillary correction to the gain correction derived from the flatfield (usually twilight flats). This correction is in the header keyword PERCORR and is typically smaller than 1 per cent and also corrects for the small quantum efficiency differences between the detectors.

Astrometric information is written in the FITS headers using a ZPN projection which allows for a description of the non uniform scale over the field of view without performing pixel resampling (necessary e.g. in the case of describing the distortions using a more usual tangential projection).

The aim of conventional flatfielding is to create a flat background by normalising out perceived variations from uniformly illuminated frames. If the sky area per pixel changes then this is reflected in a systematic error in the derived photometry. However the change of scale, i.e., the change of sky area per pixel, also creates photometric effects. The magnitude of the multiplicative correction to be applied to the measured flux can be modelled as (Irwin et al. 2008, in prep) d = ( 1 + 3 P3 R^2 P1 ) ( 1 + P3 R^2 P1 ) (5) where R is the distance from the optical axis and for the WFC the coefficients are P1 = 1 and P3 = 220 (corresponding to the PV2_1 and PV2_3 WCS keywords as defined in Greisen and Calabretta (2002)). Figure 12 shows the effect of this term in the photometry which is at a maximum level of only 2 per cent at the outer parts of the frames. The value displayed in the figure has to be subtracted from the magnitude calculated in equation 4 and is automatically included in the catalogue data products but has to be applied by the user when measuring fluxes from the images. Table 3 lists the main photometric keywords present in the image

Figure 12. Effect of scale change in photometry (magnitude versus distance to field centre).

Keyword Description

MAGZPT [mag] Magnitude zero point for default extinction measured at unit airmass MAGZRR [mag] Error in magnitude zero point AIRMASS Airmass at start of observation EXPTIME [sec] Exposure time WFFBAND Filter bandpass SKYLEVEL [counts/pix] Median sky brightness SKYNOISE [counts] Pixel noise at sky level SEEING [pixels] Mean stellar FWHM APCOR [mag] Stellar aperture correction PERCORR [mag] Sky calibration correction NUMBRMS Number of objects used when computing the astrometric fit STDCRMS [arcsec] Astrometric fit error

Table 3. Subset of relevant photometric and astrometric keywords available from the image headers after pipeline processing.

headers and needed to convert the fluxes to magnitudes as explained in this section.

4.1.1 Confidence maps

We define a confidence cij map, where j refers to pixel j of frame i, that is an inverse variance weight map in units of relative variance denoting the ”confidence” associated with the flux value in each pixel. The cij are normalised to a median level of 100 per cent (i.e. ⟨cij ⟩ = 1). This has the advantage that the same map can also be used to encode for hot, bad or dead pixels, by assigning zero confidence.

The confidence map for each frame is derived from analysis of the flat fields and is unique for each filter/detector combination. It encodes individual pixel sensitivities and allows for vignetted or bad regions to be masked. These confidence maps are used in the object detection phase of the processing.

Use of the confidence maps for weighted co-addition of frames, or for object detection, simply requires an overall estimate of the average noise properties of the frame. This can be readily derived from the measured sky noise, in the

10 González-Solares et al.

Poisson noise-limited case, or from a combination of this and the known system characteristics (e.g. gain, readout noise). All processed frames have an associated derived confidence map which is propagated through the processing chain. A detailed description of the process is given in Irwin et al. 2008, in prep.

4.2 Catalogues

The object catalogue is made available using a relational database system. We have followed the philosophy of reducing the number of tables presented to the user as much as possible. The database contains four tables which are summarised below.

• FieldsAll (table 4). Information about the field centres and number of objects detected. Each field pair has associated a unique field number (fieldno) and each of those an on/off position (onoff where a value of 0 has been assigned to the off position and 1 to the on position). These two are combined into the fieldID to provide a unique identifier for each pointing. Equatorial and galactic coordinates for each pointing as well as number of detections are also provided.

• ChipsAll (table 5). This table contains parameters about the observation (airmass, exposure time, World Coordinate System) as well as the Data Quality Control attributes for each chip, i.e, mean seeing and ellipticity, zero point, sky level, etc. Also for each pointing the Galactic coordinates are available as well as the Galactic extinction as measured from the Schlegel maps (Schlegel et al. 1998) using a 4 pixel linear interpolation for each position.

• PhotoObj (table 6). Main catalogue containing all detections with image derived parameters and calibrated magnitudes. Each row has a set of keys (chip_r_id, chip_i_id,

chip_ha_id, field_id) which allow the user to enquire

about the photometric conditions (via the ChipsAll table) under which the measurements of a particular object have been done or to which field it belongs. Additional flags (e.g seeing_flag) allow the selection of objects observed in particular (seeing) conditions. We have also included the Hierarchical Triangular Mesh index (htmid) as defined by the Sloan Digital Survey Science Archive^2. The total number of detections in this catalogue is 411 million including duplicate observations. Due to the on/off observation strategy which leads to every source being observed twice this means about 200 million unique objects.

• PhotoObjBest (table 6). Subset of PhotoObj with additional constraints used to select only those observations obtained in good photometric conditions and thus will vary little between the IDR and the Final Data Release. The data obtained in the Aug 2003 and Dec 2004 observing runs have been discarded due to poor photometric conditions. This catalogue contains only observations for those nights for which the mean magnitude zero point rms in the r^′ band is better than 5 per cent, the mean r^′ zero point is greater than 24.2 and the individual frames have been obtained in seeing conditions better than 2 arcsec and ellipticity better than 0.2. Additionally only sources detected in all three bands have been included. The total number of detections

2 see http://skyserver.org/htm/

Column Name Type Description

fieldID* long Field ID onoff* int on/off observation flag fieldno* int Field number ra* float R.A. of centre of field (deg, J2000) dec* float Dec of centre of field (deg, J2000) glon float Galactic longitude of centre of field (deg) glat float Galactic latitude of centre of field (deg) nobj int Number of objects detected

Table 4. Column names, types and description of FieldsAll table. Columns marked with an asterisk are indexed.

in this catalogue is 181 million (approximately 90 million unique objects).

• tGetNearbyObj. This is a store procedure to perform a cone search without having to use the complete haversine formula explicitly to calculate angular distances. Given the coordinates (ra, dec) in degrees and a radius (r) in arcmin it returns a list of identifiers for the objects in such defined cone. The output can then be joined with one of the PhotoObj/Best tables to return the object parameters (see example in appendix A).

Tables 4, 5 and 6 list the column names and their description. Columns marked with an asterisk are indexed by the database software, i.e., searches in those columns are particularly fast. Users should use when possible at least one indexed column in order to speed up the queries.

Each entry in each table is assigned a unique ID number used for cross reference. Figure 13 shows an object ID in the PhotoObj/Best tables and how it is decoded. Each entry in the ChipsAll table is encoded in the same way but without the last five figures which represent the object number.

Individual detection star/galaxy classifications are combined into one single value following a similar approach to the WFCAM Science Archive (WSA; Hambly et al. 2007). A classification table is defined which assigns probability values for each classification code and then each classification is combined for a merged source using Bayesian classification rules assuming each value is independent:

P (c_k) = ∏ j P (c_k)j / ∑ k ∏ j P (c_k)j (6)

where c_k is the classification flag and i denotes the i^{th} single detection passband measurement available. Decision thresholds for the resulting discrete classification flag are 90 per cent for definitive and 70 per cent for probable. An additional decision rule enforces class flag=255 (saturated) when any individual classification flag indicates saturation.

5 CROSS MATCHING WITH UKIDSS GPS

In Drew et al. (2005) we describe the importance of the IPHAS data by themselves and the several papers published to date using just IPHAS data are clearly a demonstration of that. In this section however, we want to focus in the multiwavelength aspect which the present IPHAS release will facilitate. We provide an example of cross matching

IPHAS Initial Data Release 11

Column Name Type Description

chipID* long chip ID runno* int Run number ra* float R.A. of the chip center (deg, J2000) dec* float Dec of the chip center (deg, J2000) glon float Galactic longitude (deg) glat float Galactic latitude (deg) ebv real E(B − V ) from Schlegel dust map naxis1 int Chip size along x axis (pixels) naxis2 int Chip size along y axis (pixels) mjd float MJD of observation magzpt* real Photometric zero point (Vega) magzrr real Zero point error (Vega) extinct real Atmospheric Extinction airmass* real Airmass exptime real Exposure time (seconds) night* int Night of observation (YYYYMMDD) dateobs* int Date of observation (YYYYMMDD) band* char Filter name maglim* real Magnitude limit (5σ, Vega) seeing* real Mean seeing (arcsec) elliptic* real Mean stellar ellipticity cd1 1 float CD Matrix cd1 1 float CD Matrix cd1 1 float CD Matrix cd1 1 float CD Matrix crval1 float R.A. of reference pixel (deg) crval2 float Dec of reference pixel (deg) crpix1 float x coordinate of reference pixel crpix2 float y coordinate of reference pixel percorr real Sky correction (Vega) apcor real Aperture correction (Vega) skylevel real Sky level (counts) skynoise real Sky noise (counts) nobj real number of detected objects field id* long link to FieldsAll table

Table 5. Column names, types and description of data quality control table ChipsAll. Columns marked with an asterisk are indexed.

Figure 13. The unique object ID encodes the field number, on/off flag (1=on, 0=off), date of observation (in the format YYMMDD), band (1=r^′; 2=i^′; 3=Hα) and CCD number.

the sources extracted from the IPHAS catalogue with those from the UKDSS GPS. Near infrared data are required to probe the many parts of the galaxy which suffer high extinction and an ESO-public near infrared survey of the northern plane, the UKIDSS Galactic Plane Survey, has recently begun.

We have selected a contiguous area of 2 square degrees centred at α = 20^h48^m, δ = 42^∘45^′ (l, b = 83.0, −0.5) in the Cygnus-X region and extracted all objects from the PhotoObjBest catalogue. From the Schlegel et al. (1998) maps the extinction is E(B − V ) = 3. The total number of objects in that area is 235,231. In order to assess the photometry

Column Name Type Description

objID* long Object ID objname char Object Name ra* float R.A. in degrees (deg, J2000) dec* float Dec in degrees (deg, J2000) glon float Galactic longitude (deg) glat float Galactic latitude (deg) coremag r float r^′ aperture corrected magnitude coremag i float i^′ aperture corrected magnitude coremag ha float Hα aperture corrected magnitude coremagerr r float r^′ magnitude error coremagerr i float i^′ magnitude error coremagerr ha float Hα magnitude error rmi* float r^′- i^′ colour rmha* float r^′- Hα colour rmierr float r^′- i^′ colour error rmhaerr float r^′- Hα colour error class r int r^′ star/galaxy clasification index class i int i^′ star/galaxy clasification index class ha int Hα star/galaxy clasification index ellipt r real ellipticity as measured in r^′ ellipt i real ellipticity as measured in i^′ ellipt ha real ellipticity as measured in Hα posang r real position angle as measured in r^′ posang i real position angle as measured in i^′ posang ha real position angle as measured in Hα seeing flag* int flag sources with seeing <1.7 photom flag^† int zero if object detected in all bands class flag* int combined probabily of stellar object chip r id* long link to r^′ chip table chip i id* long link to i^′ chip table chip ha id* long link to Hα chip table cx^† float Spherical coordinate x=cos(α)sin(δ) cy^† float Spherical coordinate y=sin(α)sin(δ) cz^† float Spherical coordinate z=cos(δ) htmid* long 20-deep HTM index of this object field id* long link to field table

Table 6. Column names, types and description of main photometric tables PhotoObj and PhotoObjBest. Columns marked with an asterisk are indexed. Columns marked with † are not included in the PhotoObjBest table.

Index Meaning Probability (%) Star Extended Noise Saturated

-9 Saturated 0 0 5 95 -3 Probable extended 25 70 5 0 -2 Probable star 70 25 5 0 -1 Star 90 5 5 0 0 Noise 5 5 90 0 1 Extended 5 90 5 0

Table 7. Meaning of classification index and probability assigned to each of them.

we have grouped all the objects by field and used the field overlap algorithm as described in Glazebrook et al. (1994) in order to offset the photometry to a common reference system.

For this exercise we have just set one frame as the reference calibrated frame and allowed the others to vary and solved the matrix equation for each band. The resultant magnitude offsets between the different fields is smaller than

12 González-Solares et al.

Figure 14. Positional offsets in R.A. (left) and Dec (right) between GPS and IPHAS positions (arcsec) in one of the fields included in the area considered in the text.

∼0.03 in the three bands confirming the good photometric calibration.

For the same area we extract also the near-IR magnitudes from the UKIDSS GPS survey. The GPS is carrying out a complementary survey of the galactic plane in J, H and K. Using AstroGrid access to the WFCAM Science Archive (WSA) we download the near-IR catalogue of objects detected in the area covered by the IPHAS observations. We then crossmatch the GPS and IPHAS catalogues selecting the nearest neighbour in a radius of 1.2 arcsec using STILTS^3. Figure 14 shows the positional offsets between the IPHAS and GPS catalogues for one field. The offset is effectively zero and the rms is 0.13” and 0.12” in Δα and Δδ respectively. This good agreement is not coincidence since both surveys use 2MASS as the reference astrometric system and the WFCAM processing pipeline utilises the same algorithms developed at CASU for the optical processing. It is however worth noting the success of the astrometric pipeline in such different data products.

The importance of the (r^′ − Hα, r^′ − i^′) plane has been extensively discussed in Drew et al. (2005). The mean sequence is clearly defined and sources above it are emission line objects (see figure 16). We explore here the (r^′ − Hα, r^′ − K) plane provided by the combination of IPHAS and GPS.

Using the SED model library from Pickles (1998) and the WFCAM filter profiles we have simulated the colours of normal stars. The detailed process is described in Drew et al. (2005) and Sale et al. 2008 (in prep) and we list in table 8 the synthetic colours for dwarfs and giants only. The tracks are plotted in figure 15 for extinction between zero and four. Figure 16 shows the (r^′ − Hα, r^′ − K) and (r^′ − Hα, r^′ − i^′) colour-colour diagrams with E(B − V ) = 0 and E(B − V ) = 2 reddening tracks for dwarfs and giants overplotted. We have included in these plots only sources classified as point-like in the optical and near-IR data (class_r=-1, -2, pStar>0.7) with magnitude errors smaller than 0.04 in r^′ and K. We have also excluded

3 STILTS is a set of command line tools to perform operations with tables like cross matching (http://www.star.bris.ac.uk/∼mbt/stilts/) objects brighter than r^′ =13 and K = 12 to avoid saturation and finally we have removed all sources within 10 arcsec of any WFCAM chip edge (although problematic sources in the edges are anyway flagged by the pipeline classifier).

The main sequence of objects at zero reddening is well defined in the (r^′ −Hα, r^′ −K) plane with a large population of objects up to the M stars. These data are for fields in the Cygnus-X part of the plane where there is a local essentially unreddened stellar population to a few hundred parsecs, and then a decline in stellar density and sharp rise in molecular gas and extinction to a distance of a kpc or so. Beyond this, the stellar density recovers as distant associations are traversed but of course it presents as a much more heavily reddened population. Furthermore stars later than spectral type mid-K are intrinsically faint and are only detectable at E(B − V ) < 0.8 in the figure 16 where our limit is at r^′ − K < 7. This explains the lack of K and M dwarfs reddened objects in these diagrams.

Note that no artificial offsets have been introduced to the synthetic tracks to make them fit with the observed colours. This is further confirmation of the good photometric calibration of both the IPHAS and GPS catalogues.

6 USER ACCESS

User access to the catalogues and images has been provided by the AstroGrid project. There are two separate user interfaces to the IPHAS IDR. Users who only want to extract fluxes or images around a small position of sky (there is a limit on the radius of 1 degree) will find the web interface useful^4. Given a position or an object name the user will obtain a cone search of the PhotoObjBest catalogue in a variety of output formats (VOTable, Binary VOTable, Comma Separated Value or HTML). Input lists of objects are also supported. Together with the IPHAS catalogue we provide access from the same interface to other useful VO compliant archives like SDSS DR5 (Adelman-McCarthy et al. 2007), 2MASS Point Source Catalogue (Skrutskie et al. 2006), NED and the Carlsberg Meridian Astrometric Catalogue (Evans et al. 2002). Postage stamps generation for a particular input position is also available using the finding chart utility (see example output in figure 17).

Users who want more sophisticated queries on flags and algebraic combinations of parameters (e.g. colours) will find the AstroGrid Query Builder more suited to their needs. The Query Builder is an application inside the AstroGrid VO Desktop which allows to submit an arbitrary query to the database system. The Query Builder facilitates the task of building complex queries written in Astronomical Dataset Query Language (ADQL^5; an international agreed standard based on the Structured Query Language – SQL), save the queries and submit them asynchronously to the server (this facilitates sending long running queries and retrieve the results later).

4 Available from http://www.iphas.org/idr 5 http://www.ivoa.net/Documents/latest/ADQL.html

IPHAS Initial Data Release 13

Figure 15. Reddening tracks in the r − Hα versus r − K plane for main sequence dwarfs (left) and giants (right).

Figure 16. Colour colour plots for point like sources detected in IPHAS and GPS with main sequence tracks overlayed (continuous line: main sequence dwarfs; dashed-line: giants) for reddening: E(B − V ) = 0 (blue) and 2 (red))

Figure 17. Example postage stamps obtained using the finding chart utility. Each stamp is labeled with the run number, CCD number and filter. The object corresponds to the Principe de Asturias quadrupolar nebula presented in Mampaso et al. (2006).

14 González-Solares et al.

Spectral Reddening type E(B − V ) = 0.0 E(B − V ) = 1.0 E(B − V ) = 2.0 E(B − V ) = 3.0 E(B − V ) = 4.0 (r^′ − J) (J − K) (r^′ − J) (J − K) (r^′ − J) (J − K) (r^′ − J) (J − K) (r^′ − J) (J − K) O5 V -0.955 -0.331 1.415 0.246 3.742 0.820 6.028 1.391 8.275 1.959 O9 V -0.826 -0.252 1.543 0.323 3.869 0.895 6.154 1.465 8.401 2.032 B0 V -0.720 -0.139 1.649 0.437 3.976 1.010 6.262 1.580 8.509 2.147 B1 V -0.674 -0.107 1.690 0.467 4.011 1.038 6.291 1.607 8.533 2.172 B3 V -0.706 -0.283 1.658 0.294 3.980 0.868 6.262 1.439 8.505 2.008 B8 V -0.249 0.000 2.030 0.531 4.423 1.144 6.806 1.715 9.044 2.281 B9 V -0.145 0.003 2.108 0.573 4.530 1.147 6.697 1.712 8.933 2.278 A0 V 0.005 -0.005 2.366 0.569 4.684 1.140 6.961 1.708 9.200 2.274 A2 V -0.139 -0.088 2.220 0.489 4.536 1.063 6.812 1.634 9.050 2.204 A3 V -0.155 -0.131 2.202 0.446 4.517 1.020 6.791 1.591 9.028 2.160 A5 V 0.324 0.085 2.678 0.658 4.990 1.228 7.261 1.796 9.494 2.361 A7 V 0.390 0.132 2.739 0.705 5.047 1.275 7.314 1.842 9.544 2.407 F0 V 0.543 0.159 2.888 0.731 5.192 1.300 7.455 1.867 9.683 2.432 F2 V 0.475 0.057 2.819 0.632 5.122 1.205 7.384 1.775 9.612 2.343 F5 V 0.859 0.221 3.202 0.793 5.503 1.362 7.765 1.929 9.991 2.493 F6 V 0.909 0.218 3.249 0.788 5.547 1.357 7.806 1.922 10.029 2.486 F8 V 0.995 0.230 3.333 0.802 5.630 1.372 7.887 1.939 10.109 2.504 G0 V 1.042 0.275 3.378 0.847 5.674 1.416 7.930 1.982 10.150 2.546 G2 V 1.271 0.329 3.606 0.899 5.899 1.467 8.154 2.031 10.373 2.594 G5 V 1.210 0.310 3.543 0.882 5.836 1.451 8.089 2.018 10.308 2.582 G8 V 1.415 0.398 3.746 0.968 6.035 1.536 8.286 2.101 10.502 2.664 K0 V 1.528 0.499 3.853 1.068 6.138 1.635 8.385 2.198 10.598 2.760 K2 V 1.790 0.550 4.114 1.118 6.398 1.683 8.643 2.246 10.855 2.807 K3 V 1.899 0.556 4.220 1.125 6.501 1.691 8.744 2.254 10.954 2.815 K4 V 2.096 0.648 4.411 1.216 6.686 1.781 8.924 2.344 11.128 2.904 K5 V 2.245 0.674 4.560 1.241 6.835 1.806 9.074 2.368 11.280 2.928 M0 V 2.992 0.781 5.296 1.348 7.561 1.912 9.789 2.474 11.985 3.033 M2 V 3.418 0.807 5.961 1.375 7.971 1.942 10.194 2.506 12.387 3.067 M3 V 3.953 0.820 6.237 1.388 8.482 1.953 10.695 2.516 12.878 3.076 M4 V 4.560 0.832 6.830 1.399 9.062 1.965 11.261 2.527 13.433 3.088

O8 III -0.813 -0.076 1.550 0.496 3.870 1.065 6.149 1.631 8.390 2.195 B1-2 III -0.603 -0.198 1.766 0.376 4.092 0.947 6.377 1.516 8.623 2.082 B3 III -0.427 0.018 1.935 0.591 4.253 1.161 6.530 1.729 8.769 2.295 B9 III -0.206 -0.070 2.153 0.504 4.469 1.076 6.744 1.644 8.982 2.210 B5 III -0.361 -0.078 2.000 0.497 4.318 1.068 6.595 1.637 8.835 2.203 A0 III -0.030 0.020 2.326 0.593 4.641 1.164 6.915 1.732 9.151 2.297 A3 III -0.119 -0.139 2.238 0.437 4.553 1.010 6.828 1.581 9.065 2.150 A5 III 0.323 0.101 2.675 0.673 4.985 1.243 7.254 1.810 9.486 2.374 A7 III 0.285 -0.003 2.638 0.572 4.948 1.144 7.218 1.713 9.451 2.280 F0 III 0.565 0.199 2.911 0.770 5.216 1.339 7.481 1.905 9.709 2.468 F2 III 0.595 0.100 2.936 0.673 5.236 1.242 7.496 1.809 9.720 2.373 F5 III 0.876 0.291 3.214 0.861 5.510 1.428 7.766 1.993 9.987 2.556 G0 III 1.458 0.424 3.791 0.992 6.083 1.559 8.337 2.123 10.555 2.684 G5 III 1.681 0.477 4.008 1.046 6.294 1.612 8.542 2.175 10.756 2.736 G8 III 1.727 0.516 4.053 1.086 6.339 1.653 8.586 2.217 10.799 2.779 K0 III 1.844 0.541 4.167 1.110 6.449 1.676 8.694 2.239 10.904 2.800 K1 III 1.961 0.571 4.283 1.140 6.564 1.707 8.808 2.271 11.018 2.832 K2 III 2.188 0.671 4.506 1.239 6.783 1.805 9.024 2.368 11.230 2.929 K5 III 2.948 0.864 5.253 1.431 7.519 1.995 9.748 2.557 11.945 3.116 M0 III 3.190 0.968 5.493 1.534 7.756 2.097 9.983 2.657 12.177 3.215 M1 III 3.364 0.987 5.664 1.553 7.925 2.116 10.149 2.676 12.341 3.234 M2 III 3.586 1.068 5.881 1.633 8.135 2.196 10.354 2.757 12.541 3.315 M3 III 3.910 1.062 6.200 1.627 8.450 2.190 10.664 2.750 12.846 3.307 M4 III 4.464 1.086 6.744 1.652 8.983 2.215 11.187 2.775 13.361 3.333 M5 III 5.249 1.142 7.515 1.707 9.742 2.270 11.934 2.830 14.098 3.387

Table 8. Synthetic tracks in the (r^′ − J, J − K) plane, for main sequence dwarfs and giants, calculated for a range of reddening. A similar table with optical colours only can be found in table 2 of Drew et al. 2005.

IPHAS Initial Data Release 15

6.1 Image Access

The Simple Image Access Protocol (SIAP) defines a prototype standard for retrieving image data from a variety of astronomical image repositories through a uniform interface^6 . The IPHAS images are available through a SIAP (ivo://uk.ac.cam.ast/IPHAS/images/SIAP) interface. The result of a query is, given a box centred at coordinates RA, Dec and a box size in degrees, a table of image CCDs which overlap the defined box. The table contains links to the processed image file itself. Alternatively the same list of images can be obtained with an appropriate SQL query (see below). At the moment only full image retrieval is supported. Although the graphical interface does not allow for a list of positions this is possible to accomplish from the command line interface.

6.2 Full Catalogue Access

The ingestion of all the catalogue data into a database provides the capability of using SQL in order to query the catalogue with any user defined constraint. The AstroGrid Data Set Access (DSA) provides a layer on top of any database system which makes it readily VO compliant and accessible from any VO compliant application. The examples in appendix A provide ADQL queries that can be used in the Query Builder to retrieve a variety of data.

6.3 Command line access

The AstroGrid Run Time (AR) provides a bridge between the user command line tools or programs and the VO. Catalogues can be accessed using this bridge from programming languages like Python, Perl, C or Java. There are several reasons to provide a command line interface to the VO. The more important one is the ability to perform batch queries for a list of objects and also to implement a call to a VO service inside a user written script that performs some analysis afterwards.

7 SUMMARY

We have presented the Initial Data Release of the IPHAS project. The total release contains photometry in r^′, i^′, and Hα for about 200 million objects in the northern galactic plane comprising the largest photometric sample available imaged in narrowband Hα. We have also made available a subset of this catalogue, PhotoObjBest, which contains the best observations in terms of final survey quality as defined in the text and which comprises about 60 per cent of the final release. The legacy of the survey is increased by the extensive coverage appearing from other projects spanning the wavelength range range from X-rays to near-IR and sub-millimeter.

The data have been made available through a VO compliant interface provided by AstroGrid and accessible to all VO projects.

This initial release will be supplemented with data obtained from January 2006 onwards at a later date to be

6 See http://www.ivoa.net/Documents/latest/SIA.html announced in the project web pages. At the time of writing, data-taking continues. There will also be a separate Final Release once the survey is entirely complete and all finallyaccepted data have been corrected onto a fully-interlaced uniform photometric scale.

More information and examples are available from the IPHAS IDR and AstroGrid websites at http://www.iphas.org/idr and http://www.astrogrid.org.

ACKNOWLEDGMENTS

This research has made use of data obtained using, or software provided by, the UK’s AstroGrid Virtual Observatory Project, which is funded by the Science & Technology Facilities Council and through the EU’s Framework 6 programme.

This paper makes use of data from the Isaac Newton Telescope, operated on the island of La Palma by the ING in the Spanish Observatorio del Roque de los Muchachos of the Instituto de Astrofísica de Canarias. IPHAS has been a massive effort during 5 years of observations and the following are thanked for their contributions at the telescope: Andrew Cardwell, Jesus Corral-Santana, Pasqual Diago, James Furness, Antonio García, Wilbert van Ham, Marie Hrudkova, Avon Huxor, Mansura Jaigirdar, Rob King, Richard Parker, Mark Pringle, Aaron Robotham, Ernesto Rodriguez-Flores, Miguel Santander, Rachel Smith and Carolin Winkworth.

PJG, EvdB, GR and LMR are supported by NWO- VIDI grant 639.042.201 to PJG. DS acknowledges a STFC Advanced Fellowship as well as support through the NASA Guest Observer program. QP is supported by ANSTO Access to Major Research Facilities Programme (AMRFP).

This work is based in part on data obtained as part of the UKIRT Infrared Deep Sky Survey.

REFERENCES

Adelman-McCarthy J.K., Agüeros M.A., Allam S.S., Anderson K.S.J., Anderson S.F., Annis J., et al., 2007, ApJS, 172, 634 Bahcall J.N., Soneira R.M., 1981, ApJ, 246, 122 Bohlin R.C., 2007, in C. Sterken, ed., The Future of Photometric, Spectrophotometric and Polarimetric Standardization, volume 364 of Astronomical Society of the Pacific Conference Series, 315–+ Corradi R.L.M., Rodríguez-Flores E.R., Mampaso A., Greimel R., Viironen K., Drew J.E., et al., 2007, ArXiv e-prints, 712, 0712.2391 Drew J.E., Greimel R., Irwin M.J., Aungwerojwit A., Barlow M.J., Corradi R.L.M., et al., 2005, MNRAS, 362, 753 Drew J.E., Greimel R., Irwin M.J., Sale S.E., 2008, ArXiv e-prints, 802, 0802.3868 Dye S., Warren S.J., Hambly N.C., Cross N.J.G., Hodgkin S.T., Irwin M.J., et al., 2006, MNRAS, 372, 1227 Evans D.W., Irwin M.J., Helmer L., 2002, A&A, 395, 347 Glazebrook K., Peacock J.A., Collins C.A., Miller L., 1994, MNRAS, 266, 65 Greisen E.W., Calabretta M.R., 2002, A&A, 395, 1061 Hambly N.C., Collins R.S., Cross N.J.G., Mann R.G., Read M.A., Sutorius E.T.W., et al., 2007, ArXiv e-prints, 711,

0711.3593

16 González-Solares et al.

Irwin M., Lewis J., 2001, New Astronomy Review, 45, 105 Irwin M., McMahon R., Walton N., González-Solares E., Hodgkin S., Irwin J., et al., 2005, The Newsletter of the Isaac Newton Group of Telescopes (ING Newsl.), issue no. 9, p. 8-11., 9, 8 Irwin M.J., 1985, MNRAS, 214, 575 Irwin M.J., Trimble V., 1984, AJ, 89, 83 Kuijken K., Bender R., Cappellaro E., Muschielok B., Baruffolo A., Cascone E., et al., 2004, in A.F.M. Moorwood, M. Iye, eds., Ground-based Instrumentation for Astronomy. Edited by Alan F. M. Moorwood and Iye Masanori. Proceedings of the SPIE, Volume 5492, pp. 484-493 (2004)., volume 5492 of Presented at the Society of Photo-Optical Instrumentation Engineers (SPIE) Conference, 484–493 Landolt A.U., 1992, AJ, 104, 340 Lucas P.W., Hoare M.G., Longmore A., Schroder A.C., Davis C.J., Adamson A., et al., 2007, ArXiv e-prints, 712,

0712.0100

Mampaso A., Corradi R.L.M., Viironen K., Leisy P., Greimel R., Drew J.E., et al., 2006, A&A, 458, 203 McMahon R.G., Walton N.A., Irwin M.J., Lewis J.R., Bunclark P.S., Jones D.H., 2001, New Astronomy Review, 45, 97 Naylor T., 1998, MNRAS, 296, 339 Parker Q.A., Phillipps S., Pierce M.J., Hartley M., Hambly N.C., Read M.A., et al., 2005, MNRAS, 362, 689 Pickles A.J., 1998, PASP, 110, 863 Pilbratt G.L., 2005, in A. Wilson, ed., ESA Special Publication, volume 577 of ESA Special Publication, 3–10 Russell D.M., Fender R.P., Gallo E., Kaiser C.R., 2007, MNRAS, 376, 1341 Schlegel D.J., Finkbeiner D.P., Davis M., 1998, ApJ, 500, 525 Scott D., Tout C.A., 1989, MNRAS, 241, 109 Skrutskie M.F., Cutri R.M., Stiening R., Weinberg M.D., Schneider S., Carpenter J.M., et al., 2006, AJ, 131, 1163 Steeghs D., Drew J., Greimel R., Barlow M., Gaensicke B., Drake J., et al., 2007, The Astronomer’s Telegram, 1031, 1 Steeghs D., Greimel R., Drew J., Irwin M., Gaensicke B., Groot P., et al., 2006, The Astronomer’s Telegram, 795, 1 Stetson P.B., 2000, PASP, 112, 925 Wareing C.J., O’Brien T.J., Zijlstra A.A., Kwitter K.B., Irwin J., Wright N., et al., 2006, MNRAS, 366, 387 Witham A.R., Knigge C., Drew J.E., Greimel R., Steeghs D., Gänsicke B.T., et al., 2008, MNRAS, 127–+,

arXiv:0712.0988

Witham A.R., Knigge C., Gänsicke B.T., Aungwerojwit A., Corradi R.L.M., Drew J.E., et al., 2006, MNRAS, 369, 581 Zacharias N., McCallon H.L., Kopan E., Cutri R.M., 2003, The International Celestial Reference System: Maintenance and Future Realization, 25th meeting of the IAU, Joint Discussion 16, 22 July 2003, Sydney, Australia, 16

APPENDIX A: EXAMPLE USAGE ACCESS

Example 1: Return coordinates, magnitudes and magnitude errors of objects in a rectangular area.

This is the most basic query returning all objects in a specific box with R.A. between 300 and 301 degrees and Dec between 30 and 31 degrees.

SELECT P.ra, P.dec,
  P.coremag_r, P.coremag_i, P.coremag_ha,
  P.coremagerr_r, P.coremagerr_i, P.coremagerr_ha
FROM PhotoObjBest as P
WHERE P.ra BETWEEN 300.0 AND 301.0
  AND P.dec BETWEEN 30.0 and 31.0

Example 2: Return coordinates and magnitudes of objects in a cone defined by its center at RA=300.0 and Dec=30.0 and radius r=10 arcmin.

In this case instead of coding the whole trigonometry in the query we use the auxiliary table tGetNearbyObj which returns the object IDs which satisfy a cone search specified by the center coordinates (ra, dec) and radius (r) in minutes of arc:

SELECT P.ra, P.dec,
  P.coremag_r, P.coremag_i, P.coremag_ha,
  P.coremagerr_r, P.coremagerr_i, P.coremagerr_ha
FROM PhotoObjBest as P, tGetNearbyObj as G
WHERE G.ra=300.0 AND G.dec=30.0 AND G.r=10.0
  AND P.objID = G.objID

Example 3: As previous example but only return objects classified as point-like in r and observed in conditions of seeing best than 1.5 arcsec as measured in the r band.

In this query we are asking for information about the quality of observations and this is stored in the ChipsAll table. We need therefore to join the results with this table in order to select only observation with good seeing conditions.

SELECT P.ra, P.dec,
  P.coremag_r, P.coremag_i, P.coremag_ha,
  P.coremagerr_r, P.coremagerr_i, P.coremagerr_ha
FROM PhotoObjBest as P, tGetNearbyObj as G,
  ChipsAll as CR
WHERE G.ra=300.0 AND G.dec=30.0 AND G.r=10.0
  AND CR.seeing<1.5 AND (P.class_r=-1 OR P.class_r=-2)
  AND P.objID = G.objID AND P.chips_r_id=CR.chipID

Adding additional constraints on e.g. object colours, magnitude limits, observation dates are trivially implemented in the same way, e.g.:

SELECT P.ra, P.dec,
  P.coremag_r, P.coremag_i, P.coremag_ha,
  P.coremagerr_r, P.coremagerr_i, P.coremagerr_ha
FROM PhotoObjBest as P, tGetNearbyObj as G,
  ChipsAll as CR
WHERE G._ra=300.0 AND G._dec=30.0 AND G._r=10.0
  AND P.coremag_r-P.coremag_ha>0.8
  AND P.coremag_r-P.coremag_i>1.5
  AND P.coremagerr_r<0.02

Example 4: Select all objects observed in a particular offset field.

The following example returns all objects detected in a particular observation from the (not cleaned) PhotoObj catalogue.

SELECT * FROM PhotoObj as P
  JOIN FieldsAll as F ON (F.fieldID = P.field_id)
WHERE F.fieldno=7012 AND F.onoff=0

IPHAS Initial Data Release 17

Example 5: Return the number and position of fields observed in the best photometric conditions.

Section 4.2 explains the constrains used to define the catalogue of best observations. The following query returns the number, position and photometric characteristics of the fields which satisfy those conditions.

SELECT
    CC.night, F.fieldID, F.fieldno, F.onoff,
    F.ra, F.dec, F.glon, F.glat,
    T.magzpt_mean, T.magzrr_mean,
    CC.seeing, CC.elliptic
FROM
   ( SELECT
      C.night,
      sum(C.magzpt)/count(C.magzpt) as magzpt_mean,
      sum(C.magzrr)/count(C.magzrr) as magzrr_mean
    FROM FieldsAll F, ChipsAll C
    WHERE
      C.field_id = F.fieldID AND C.band=’r’
      AND C.chipno=4
   GROUP BY night) AS T,
   ChipsAll CC, FieldsAll F
WHERE
   T.night = CC.night AND CC.field_id = F.fieldID
   AND CC.chipno=4 AND CC.band=’r’ AND CC.seeing<2
   AND CC.elliptic<0.2 AND T.magzpt_mean>24.2
   AND T.magzrr_mean<0.05
ORDER BY night

The IDR web site (http://idr.iphas.org) provides further information as well as examples on accessing the catalogue from the command line.

This paper has been typeset from a TEX/ L^ATEX file prepared by the author.