arXiv:0801.0594v1 [astro-ph] 3 Jan 2008

Astronomy & Astrophysics manuscript no. sori-amber © ESO 2020 November 30, 2020

Letter to the Editor

J, H, K spectro-interferometry of the Mira variable S Orionis^⋆

M. Wittkowski^1, D. A. Boboltz^2, T. Driebe^3, J.-B. Le Bouquin^4 F. Millour^3 K. Ohnaka^3, and M. Scholz^{5,6}

1 ESO, Karl-Schwarzschild-Str. 2, 85748 Garching bei München, Germany, e-mail: mwittkow@eso.org 2 US Naval Observatory, 3450 Massachusetts Avenue, NW, Washington, DC 20392-5420, USA 3 Max-Planck-Institut für Radioastronomie, Auf dem Hügel 69, 53121 Bonn, Germany 4 ESO, Casilla 19001, Santiago 19, Chile 5 Institut für Theoretische Astrophysik der Univ. Heidelberg, Albert-Ueberle-Str. 2, 69120 Heidelberg, Germany 6 Institute of Astronomy, School of Physics, University of Sydney, Sydney NSW 2006, Australia

Received . . . ; accepted . . .

ABSTRACT

Aims. We present J, H, K spectrally dispersed interferometry with a spectral resolution of 35 for the Mira variable S Orionis. We aim at measuring the diameter variation as a function of wavelength that is expected due to molecular layers lying above the continuumforming photosphere. Our final goal is a better understanding of the pulsating atmosphere and its role in the mass-loss process. Methods. Visibility data of S Ori were obtained at phase 0.78 with the VLTI/AMBER instrument using the fringe tracker FINITO at 29 spectral channels between 1.29 μm and 2.32 μm. Apparent uniform disk (UD) diameters were computed for each spectral channel. In addition, the visibility data were directly compared to predictions by recent self-excited dynamic model atmospheres. Results. S Ori shows significant variations in the visibility values as a function of spectral channel that can only be described by a clear variation in the apparent angular size with wavelength. The closure phase values are close to zero at all spectral channels, indicating the absence of asymmetric intensity features. The apparent UD angular diameter is smallest at about 1.3 μm and 1.7 μm and increases by a factor of ∼ 1.4 around 2.0 μm. The minimum UD angular diameter at near-continuum wavelengths is Θ_{UD}=8.1±0.5 mas, corresponding to R ∼ 420 R_⊙. The S Ori visibility data and the apparent UD variations can be explained reasonably well by a dynamic atmosphere model that includes molecular layers, particularly water vapor and CO. The best-fitting photospheric angular diameter of the model atmosphere is Θ_{Phot}=8.3±0.2 mas, consistent with the UD diameter measured at near-continuum wavelengths. Conclusions. The measured visibility and UD diameter variations with wavelength resemble and generally confirm the predictions by recent dynamic model atmospheres. These size variations with wavelength can be understood as the effects from water vapor and CO layers lying above the continuum-forming photosphere. The major remaining differences between observations and model prediction are very likely due to an imperfect match of the phase and cycle combination between observation and available models.

Key words. Techniques: interferometric – Stars: AGB and post-AGB – Stars: atmospheres – Stars: individual: S Ori

1. Introduction

Mira stars are low-mass, large-amplitude, long-period variable stars on the AGB, evolving toward the planetary nebula and white dwarf phases. They exhibit a mass-loss rate on the order of ∼10^{−6} M_⊙/year that significantly affects the further stellar evolution and is one of the most important sources for the chemical enrichment of the interstellar medium. The dust condensation sequence, the wind-driving mechanism, and the role of pulsation are currently not well understood, in particular for oxygen-rich AGB stars (Woitke et al. 2006; Höfner & Andersen 2007). The pulsating atmospheres of Mira stars can become very extended because of dynamic effects including shock fronts, and they are very cool in their outer parts. Here, molecules can form, which for O-rich stars are most importantly H_2O, CO, TiO, and SiO (Tsuji et al. 1997; Tej et al. 2003; Ohnaka 2004). Wittkowski et al. (2007) found for the case of S Ori that Al_2O_3 dust condenses within the extended atmosphere at phase-dependent distances of 1.8–2.4 photospheric radii. This extended atmosphere, which is characterized by phase-dependent temperature and density stratifications, the presence of molecular layers, and the formation of dust, is thus of particular interest for our better understand-

⋆ Based on observations made with the VLT Interferometer (VLTI) at Paranal Observatory under program ID 080.D-0691 ing of pulsation and mass loss. Observed radii of Mira stars have been found to differ for different optical and infrared bandpasses (e.g. Thompson et al. 2002; Mennesson et al. 2002; Ireland et al. 2004; Perrin et al. 2004; Eisner et al. 2007), and this has been attributed to the presence of molecular layers located above the continuum-forming photosphere. Here, we present both a spectro-interferometric observation of the Mira star S Ori that covers the near-infrared J, H, and K bands simultaneously at a spectral resolution of 35 and a comparison to recent self-excited dynamic model atmospheres.

S Ori is a Mira variable star with spectral type M6.5e–M9.5e and V magnitude 7.2–14.0 (Samus et al. 2004). We use a Julian Date of last maximum brightness T_0 = 2453190 days, a period P = 430 days (as in Wittkowski et al. 2007), and the distance of 480 pc ± 120 pc from van Belle et al. (2002). The broadband near-infrared K UD angular diameter of S Ori has been measured by van Belle et al. (1996), Millan-Gabet et al. (2005), and Boboltz & Wittkowski (2005) to values between 9.6 mas and 10.5 mas at different phases. Joint VLTI/MIDI and VLBA/SiO maser observations by Wittkowski et al. (2007) have shown that S Ori exhibits significant phase-dependencies of the atmospheric extension and dust shell parameters with photospheric angular diameters between 7.9 mas and 9.7 mas.

2 M. Wittkowski et al.: J, H, K spectro-interferometry of the Mira variable S Orionis

Table 1. Observation log. Night starting 12 October 2007, JD 2454386.

Target Purpose Θ_{LD} DIT Time Φ_{Vis} B_p [m] PA_p AM Seeing τ_0 [mas] [msec] [UTC] E0-G0/G0-H0/E0-H0 deg [^{′′}] [msec] 45 Eri Calibrator (K3 II-III) 2.15±0.04 25 08:03-08:07 16.0/31.9/47.9 -107 1.1 1.3 1.3 45 Eri Calibrator (K3 II-III) 2.15±0.04 50 08:09-08:12 16.0/32.0/48.0 -107 1.1 1.3 1.3 γ Eri Check star (M0.5 IIIb) 8.74±0.09 25 08:22-08:26 15.6/31.2/46.8 -104 1.1 1.4 1.2 γ Eri Check star (M0.5 IIIb) 8.74±0.09 50 08:28-08:32 15.5/31.0/46.5 -104 1.1 1.4 1.2 S Ori Science target 25 08:45-08:49 0.78 15.9/31.8/47.8 -107 1.1 1.3 1.3 S Ori Science target 50 08:52-08:57 0.78 16.0/31.9/47.9 -107 1.1 1.3 1.3 α Hor Calibrator (K2 III) 2.76±0.03 25 09:14-09:18 14.5/28.9/43.3 -91 1.1 1.2 1.4 α Hor Calibrator (K2 III) 2.76±0.03 50 09:21-09-24 14.3/28.7/43.0 -90 1.1 1.4 1.2 S Ori Science target 25 09:36-09:40 0.78 15.9/31.8/47.7 -106 1.1 1.5 1.1

2. Observations and data reduction

We obtained near-infrared J, H, K interferometry of S Ori with the instrument AMBER (Petrov et al. 2007) in low-resolution mode at the ESO VLTI using the fringe tracker FINITO and three VLTI Auxiliary Telescopes (ATs) on 12 October 2007 (JD 2454386). The ATs were positioned on stations E0, G0, and H0. The date of observation corresponds to a visual phase Φ_{Vis}=0.78, with an uncertainty of about 0.1. The details of the observing sequence are listed in Table 1, including the projected baseline lengths (B_p) and position angles (PA_p), the airmass (AM), and the optical seeing and coherence time. Ambient conditions were not very good but stable. The airmass was the same for all observations. Data were recorded using two different detector integration times (DITs) of 25 msec and 50 msec.

The VLTI fringe-tracker FINITO records fringes on the two shortest baselines using 70% of the H-band light. Output signals are processed in realtime and used to compensate for the fringe motion due to atmospheric turbulence. Owing to the low coherence time during the observations, FINITO was only able to provide average performances of 0.2–0.4 μm RMS (to be compared with 0.1 μm RMS achieved in good conditions). Nevertheless such a performance is sufficient for increasing the signal-to-noise ratio (S/R) of the AMBER data and stabilizing the transfer function. All observations used here were obtained with exactly the same FINITO controller parameters, which is important for avoiding systematic biases in calibrating the absolute visibility.

In addition to S Ori, the two calibration stars 45 Eri and α Hor were observed close in time, as was γ Eri. The last is a regular non-pulsating M 0.5 giant with a well-known angular diameter similar to that of S Ori which is not expected to exhibit strong effects from molecular layers. This data is used to check that any strong wavelength-dependent features found for S Ori are not caused by any systematic effects of the instrument. The spectral types and angular diameters of the calibration and check stars are from Bordé et al. (2002).

Raw visibility and closure phase values were computed using the latest version of the amdlib package (version 2.0 beta 2b) and the yorick interface provided by the AMBER consortium and the Jean-Marie Mariotti Center. Absolute wavelength correlation was performed by correlating the raw spectra of all four stars with a model of the atmospheric transmission with the same spectral resolution. In particular, we used a plateau in the transmission curve at λ ∼ 2.0 μm. The offset with respect to the original wavelength table was 3 spectral channels (0.1 μm at a wavelength of 2.0 μm). We estimated the error of the absolute wavelength calibration to 1 pixel (∼ 0.03 μm). Individual frames were averaged after frame selection keeping 70% of the best frames based on piston (to remove the frames when the FINITO loop was not closed) and out of these keeping 30% of the best frames based on S/R. We verified that keeping up to 80% of the best frames based on SNR did not significantly change the results. The S Ori and γ Eri visibility data were calibrated for each DIT value separately using the 45 Eri and α Hor calibration star data. After calibration, the different calibrated S Ori and γ Eri data were averaged. The errors of the calibrated visibility data include the statistical error of averaging the single frames, the errors of the calibration stars’ angular diameters, and the variation of the available transfer function measurements.

3. Results

Figures 1 and 2 show the resulting visibility and closure phase data for S Ori and for the check star γ Eri, respectively. The gaps in the visibility data around 1.45 μm and 1.85 μm correspond to the regions between the bands. Also shown are the best fitting models of a UD with a constant diameter, of a Gaussian disk with a constant diameter, and of atmosphere models. The latter are for S Ori the M18n model (described in detail below in Sect. 4), and for γ Eri an ATLAS 9 model atmosphere (Kurucz 1993) with T_{eff}=3750 K, log g=1.5, and solar chemical abundance as expected for γ Eri (Bordé et al. 2002). The comparison of the S Ori visibility data to the dynamic model atmosphere is described in detail below in Sect. 4.

The calculation of synthetic visibility values and the fits to the interferometric data were performed as in Wittkowski et al. (2006, 2007). The fitted angular diameter of the Gaussian model corresponds to the FWHM, that of the plane-parallel ATLAS 9 model to the 0% intensity (limb-darkened) radius, and that of the M18n model to the 1.04 μm (photospheric) radius (as defined in Ireland et al. 2004b). The best-fit angular diameters are S Ori: Θ_{UD}=10.8 mas; Θ_{Gaussian}=6.9 mas; Θ_{M18n}=8.3 mas γ Eri: Θ_{UD}=8.5 mas; Θ_{ATLAS9}=8.9 mas. The errors are σ ∼ 0.2 mas

The visibility data of the check star γ Eri can be described well by a UD of constant diameter and by the ATLAS 9 model atmosphere. There are no significant wavelength-dependent deviations between measured visibility data and the UD model. It is not yet clear whether the relatively low J-band visibilities for the G0-H0 baseline and the deviations in the closure phase values near the flip are caused by an asymmetric stellar surface feature or a systematic calibration uncertainty. Note that the angular diameter of γ Eri based on a given model is well-constrained by the position of the visibility minimum, which is independent of an absolute visibility calibration. The resulting angular diameter Θ_{ATLAS9}=8.9±0.2 mas is consistent with the value given in Bordé et al. (2002) of Θ_{LD}=8.74±0.09 mas.

The visibility data of S Ori show significant wavelengthdependent features clearly deviating from UD and Gaussian

M. Wittkowski et al.: J, H, K spectro-interferometry of the Mira variable S Orionis 3

Fig. 1. Measured S Ori visibility data compared to models of a UD with a constant diameter (red dashed lines), of a Gaussian disk of constant diameter (green dashed line), and of the M18n atmosphere model (blue solid line). For the projected baseline lengths and angles see Table 1.

Fig. 2. Measured γ Eri visibility data compared to models of a UD with a constant diameter (red dashed line) and of an ATLAS 9 model atmosphere with T_{eff}=3750 K, log g=1.5, solar chemical abundance (blue solid line). For the projected baseline lengths and angles see Table 1.

Fig. 3. S Ori UD diameter values as a function of wavelength compared to the prediction by the M18n model atmosphere. Also indicated are the positions of H_2O and CO bands after Lançon & Wood (2000).

models of constant diameter on all three baselines. This indicates variations in the apparent angular diameter. The S Ori closure phase values are consistent with zero at all spectral channels, indicating the absence of asymmetric features in the intensity distribution. In order to characterize the variation of S Ori’s angular diameter as a function of wavelength, we fitted UD diameters to the data of each spectral channel separately. Figure 3 shows the resulting UD diameter values as a function of wavelength. Note that the intensity profile of a Mira star is generally not expected to be close to a UD and that this approach can only give a rough estimate of S Ori’s characteristic size as a function of wavelength. Fits of Gaussian functions lead to similar results. The apparent UD angular diameter shows clear variations with wavelength. It is smallest at about 1.3 μm and 1.7 μm and increases by a factor of ∼ 1.4 around 2.0 μm. The minimum UD angular diameter of S Ori at the near-continuum wavelengths is Θ_{UD}=8.1±0.5 mas. This result at visual phase 0.78 is consistent with the S Ori photospheric angular diameters between 7.9 mas at phase 0.55 and 9.7 mas at phase 1.15 derived in Wittkowski et al. (2007) based on VLTI/MIDI data and modeling with dynamic model atmospheres and a radiative transfer model of the dust shell. These photospheric angular diameters are also consistent with previous broadband measurements (cf. Wittkowski et al. 2007). With the adopted distance to S Ori, the angular diameter Θ_{UD}=8.1±0.5 mas corresponds to a radius 418 ± 130 R_⊙.

4. Comparison to dynamic Mira star atmosphere models

Few dynamic atmosphere models for oxygen-rich Mira stars are available that include the effects of molecular layers. The P and M model series (Ireland et al. 2004a, 2004b) are complete selfexcited dynamic model atmospheres of Mira stars designed to match the prototype oxygen-rich Mira stars o Cet and R Leo. They have been used successfully for comparisons to recent broadband interferometric data of o Cet and R Leo (Woodruff et al. 2004; Fedele et al. 2005). Compared to o Cet and R Leo, S Ori is a slightly cooler Mira variable with a longer period, a higher main-sequence precursor mass, and a larger radius. However, when scaled to variability phases between 0 and 1 and to the corresponding angular size on the sky, the general model results are not expected to be dramatically different for S Ori compared to o Cet and R Leo (cf. the discussion in Wittkowski et al. 2007). The M model series was chosen to model the atmosphere of S Ori by Wittkowski et al. (2007) as the currently best available option to describe Mira star atmospheres. Monochromatic center-to-limb variations (CLVs) at 46 angles between 0 and 5 R_p based on the P and M models were recomputed for the wavelength range from 1–2.5 μm in steps of 0.001 μm.

The P and M dynamic model atmospheres predict significant changes in the monochromatic radius R_λ = R_λ(τ_λ = 1), caused by molecular layers that lie above the continuum-forming photosphere and significantly affect certain bandpasses. Figure 4

4 M. Wittkowski et al.: J, H, K spectro-interferometry of the Mira variable S Orionis

Fig. 4. Monochromatic τ_λ = 1 Mira star radii predicted by the M model series for the example of the M16n (model phase 1.60), M18n (1.84), and M20 (2.05) models. The red line indicates the model continuum radius excluding atomic and molecular features. The spectral resolution of the model is 0.001 μm. Also indicated are the positions of H_2O and CO bands after Lançon & Wood (2000).

shows the monochromatic radius R_λ = R_λ(τ_λ = 1) in units of the non-pulsating parent star radius for the example of three models of the series. It illustrates the strong phase dependence of the molecular layers. The models are M16n (model phase 1.60), M18n (1.84), and M20 (2.05) models. The red lines denote for comparison the R_λ values solely based on the continuum radiation excluding all atomic and molecular features. Also shown are the positions of the H_2O and CO bands after Lançon & Wood (2000) and references therein. The most prominent features of these model curves in the near-infrared region are two water vapor features around 1.4 μm and 1.9 μm, and also CO features around 1.6 μm and 2.4 μm. The strengths, shapes, and widths of these molecular features depend strongly on the stellar phase (and also on cycle), as is evident from the comparison of the three model curves. Also, the relative strengths of the molecular features varies with stellar phase.

Model M18n provides the best formal fit to our S Ori AMBER visibility data out of the 20 available phase and cycle combinations of the M series. The synthetic visibility values based on the M18n model compared to our AMBER observation are indicated in Fig. 1. Here, the angular photospheric diameter corresponding to the 1.04 μm (photospheric) model radius (defined in Ireland et al. 2004b) is Θ_{M18n}=8.3 ± 0.2 mas, consistent with the UD diameter at near-continuum wavelengths 1.3 μm and 1.7 μm of Θ_{UD}=8.1±0.5 mas. The theoretical R_λ(τ_λ = 1) radii in Fig. 4 cannot be compared directly to the UD diameters derived from our AMBER data (Fig. 3), because of the different spectral resolution and because the model-predicted CLVs can be very different from a UD model (so that different radius definitions are not equal). The translation of the model prediction into a UD diameter depends on the exact shape of the bandpassaveraged CLV and the baselines used. To compare the model predictions to the measured UD values in Fig. 3, we fitted UD diameters to the synthetic visibility values of the M18n model using exactly the same spectral channels, baseline configuration, and fit method as for our AMBER data. The resulting model prediction for the UD diameter as a function of wavelength is shown in Fig. 3, in comparison to the values derived from the observation.

Figures 1 and 3 show that our AMBER visibility data can be described reasonably well by the dynamic atmosphere model M18n. The differences between observations and model prediction are most likely due to an imperfect match of the phase and cycle combination between observation and available M models of the series. Looking at Figs. 3 and 4, it is evident that a better fit to our AMBER data could be obtained with a model that shows a stronger 1.4 μm water vapor feature of the same shape compared to M18n (as seen for instance in the case of M20), and at the same time a just as strong but broader 1.9 μm feature (as for instance in the case of M16n). It is quite possible that such a combination of the two water-vapor features could appear for a model of another phase-cycle combination. Also, some differences between M model predictions and observations of S Ori are expected due to the different stellar parameters of S Ori compared to the parent star of the M model series. Finally, differences can also be caused by remaining uncertainties in the absolute calibration of visibility values and of the wavelength scale. The S Ori dust shell of τ_V =1.5–2.5 as modeled in Wittkowski et al. (2007) is not expected to have a noticeable effect on our near-infrared visibility data, because its contribution to the visibility was already small at 8 μm and because the visibility data are calibrated separately for each spectral channel.

In summary, our AMBER observations of S Ori generally confirm the predictions by the M model series and we find that the observed variation of diameter with wavelength can be understood as the effect of phase-dependent water vapor and CO layers lying above the photosphere. The M model series can be used reasonably well to model the atmosphere of a Mira star such as S Ori and to derive a reliable photospheric radius based on broadband data. More such observations are needed to confirm and constrain the model predictions in more detail and to monitor the predicted phase dependence of the strength and characteristics of the molecular layers. Simultaneously obtained spectra would be a valuable addition.

Acknowledgements. We acknowledge with thanks the use of the AMBER data reduction software from the JMMC (version 2.0 beta 2b).

References

Boboltz, D. A., & Wittkowski, M. 2005, ApJ, 618, 953 Bordé, P., Coudé du Foresto, V., Chagnon, G., & Perrin, G. 2002, A&A, 393, 183 Eisner, J. A., Graham, J. R., Akeson, R. L., et al. 2007, ApJ, 654, L77 Fedele, D., Wittkowski, M., Paresce, F., et al. 2005, A&A, 431, 1019 Höfner, S., & Andersen, A. C. 2007, A&A, 465, L39 Ireland, M., Tuthill, P., Robertson, G., et al. 2004, ASP Conf. Proc. 310, 327 Ireland, M. J., Scholz, M., & Wood, P. R. 2004a, MNRAS, 352, 318 Ireland, M. J., Scholz, M., Tuthill, P., & Wood, P. 2004b, MNRAS, 355, 444 Kurucz, R. 1993, Limbdarkening for 2 km/s grid (No. 13): [+0.0] to [-5.0].

Kurucz CD-ROM No. 17. Smithsonian Astrophysical Observatory Lançon, A., & Wood, P. R. 2000, A&AS, 146, 217 Mennesson, B., Perrin , G., Chagnon, G., et al. 2002, ApJ, 579, 446 Millan-Gabet, R., Pedretti, E., Monnier, J. D., et al. 2005, ApJ, 620, 961 Ohnaka, K. 2004, A&A, 424, 1011 Perrin, G., Ridgway, S. T., Mennesson, B., et al. 2004, A&A, 426, 279 Petrov, R. G., Malbet, F., Weigelt, G., et al. 2007, A&A, 464, 1

M. Wittkowski et al.: J, H, K spectro-interferometry of the Mira variable S Orionis 5

Samus, N. N., Durlevich, O. V., & et al. 2004, Combined General Catalog of Variable Stars (GCVS4.2, 2004 Ed.) VizieR Online Data Catalog, 2250 Tej, A., Lançon, A., & Scholz, M. 2003, A&A, 401, 347 Thompson, R. R., Creech-Eakman, M. J., & van Belle, G. 2002, ApJ, 577, 447 Tsuji, T., Ohnaka, K., Aoki, W., & Yamamura, I. 1997, A&A, 320, L1 van Belle, G. T., Dyck, H., Benson, J., & Lacasse, M. 1996, AJ, 112, 2147 van Belle, G. T., Thompson, R. R., & Creech-Eakman, M. J 2002, AJ, 124, 1706 Woitke, P. 2006, A&A, 460, L9 Woodruff, H. C., Eberhardt, M., Driebe, T., et al. 2004, A&A, 421, 703 Wittkowski, M., Hummel, C. A., Aufdenberg, J. P., & Roccatagliata, V. 2006, A&A, 460, 843 Wittkowski, M., Boboltz, D. A., Ohnaka, K., Driebe, T., & Scholz, M. 2007, A&A, 470, 191