arXiv:0804.3108v1 [astro-ph] 18 Apr 2008

Hydrodynamic Simulation of a nano-flare heated multi-strand solar atmospheric loop

Aveek Sarkar and Robert W Walsh

Centre for Astrophysics, University of Central Lancashire, Preston, Lancashire, PR1 2HE, UK

asarkar1@uclan.ac.uk

ABSTRACT

There is a growing body of evidence that the plasma loops seen with current instrumentation (SOHO, TRACE and Hinode) may consist of many subresolution elements or strands. Thus, the overall plasma evolution we observe in these features could be the cumulative result of numerous individual strands undergoing sporadic heating. This paper presents a short (10^9 cm ≡ 10 Mm) “global loop” as 125 individual strands where each strand is modelled independently by a one-dimensional hydrodynamic simulation. The energy release mechanism across the strands consists of localised, discrete heating events (nanoflares). The strands are “coupled” together through the frequency distribution of the total energy input to the loop which follows a power law distribution with index α. The location and lifetime of each energy event occurring is random. Although a typical strand can go through a series of well-defined heating/cooling cycles, when the strands are combined, the overall quasi-static emission measure weighted thermal profile for the global loop reproduces a hot apex/cool base structure. Localised cool plasma blobs are seen to travel along individual strands which could cause the loop to ‘disappear’ from coronal emission and appear in transition or chromospheric ones. As α increases (from 0 to 2.29 to 3.29), more weight is given to the smallest heating episodes. Consequently, the overall global loop apex temperature increases while the variation of the temperature around that value decreases. Any further increase in α saturates the loop apex temperature variations at the current simulation resolution. The effect of increasing the number of strands and the loop length as well as the implications of these results upon possible future observing campaigns for TRACE and Hinode are discussed.

Subject headings: Sun - activity; Sun - corona; hydrodynamics - Sun

– 2 –

1. Introduction

The discovery that a significant proportion of the radiation emitted from the solar corona is concentrated along well-defined loops represented a major advance in our understanding of the Sun. These loops are the basic structural elements of the atmosphere with the Solar and Heliospheric Observatory (SOHO), Transition Region and Coronal Explorer (TRACE) and the Hinode missions revealing them in unprecedented detail. It is now believed universally that these features coincide with magnetic flux tubes and occur as the plasma and thermal energy can flow along but not easily across the magnetic field. However it must be noted that the phrase “loop” is an inclusive, general term. In particular, there is the discussion as to whether an individual loop has yet to be resolved; that is, do even TRACE EUV loops further consist of a bundle of filamentary plasma strands at a range of temperatures which, when averaged over, give the appearance of uniformly bright structures (Lenz et al., 1999)? Using SOHO-CDS & Yohkoh soft X-ray observations for 13 positions along a given loop structure, Schmelz et al. (2001) argue that the resulting broad Differential Emission Measure (DEM) is a strong indicator of a multi-thermal plasma. Since the heat transport across the magnetic field should be very small, the conclusion could be that the loop under investigation is multithreaded in nature.

One dimensional (1D) hydrodynamic (HD) modelling of a loop as plasma evolving along individual field-lines has been popular since the late 1970’s (Peres, 2000; Walsh et al., 1995). However, it must be recognised that if the range of loop structures we can observe do consist of many “sub-resolution” elements, then these 1D models are really only applicable to an individual plasma element or strand. Thus, a loop is an amalgamation of these strands. They could operate in thermal isolation from one another with a wide range of temperatures occurring across the structural elements.

Up until now, several multi-strand static models have been associated with specific observations. For example, Reale & Peres (2000) showed that their multi-strand (6) hydrostatic solution is in rough agreement with an isothermal loop observed by TRACE. Aschwanden et al. (2000) compares hydrostatic solutions with 41 TRACE EUV loops of different lengths; mostly they fall short of being able to reproduce the TRACE emission (the loops appear to be denser that those generated by static calculations). To explain the discrepancy, Winebarger et al. (2003) concludes that it is unlikely that the over-dense loops can be reconciled with any static model.

Warren et al. (2002) outline a multi-strand loop model by choosing ten randomly selected time periods from their single hydrodynamic loop simulation, synthesise TRACE 171 and 195 Å intensities and average the resulting emission over the threads. They obtain a flat 171/195 filter ratio along the loop resulting in much larger coronal intensities relative

– 3 –

to those estimated by static heating. Ugarte-Urra et al. (2006) employ an impulsive and quasi-static heat input to a hydrodynamic loop model to examine the subsequent evolution in X-ray and EUV; they find that compared to observed loops, the simulated EUV response lifetime for a single cooling loop is much shorter than those observed from TRACE. Also, Warren (2006) employs a series of multi-strand (50) loop simulations to reproduce the high temperature evolution of solar flare: the numerical results suggest that an individual strand has an optimum heating timescale of a few hundred seconds.

Thus this leads onto another important question of how the million degree plasma within loops is heated in the first place. One of several possible theoretical heating mechanisms is the concept that the plasma is energised by the cumulative effect of numerous, small scale (∼ 10^{24} erg per event), localized, time-dependent energy bursts or nano-flares (Parker, 1988). It is observed already that for larger solar flares their frequency of occurrence f has a dependence upon the energy content (E) and that it follows a power law; df/dE = E_0E^{−α}, (1) with an index of α ∼ 1.8. Hudson (1991) pointed out that for the corona to be heated predominantly by nano-flares, a steeper-slope (α > 2) would be required. Several authors claim to have observed this steeper distribution from observed brightenings in both EUV and X-rays (eg. Pauluhn & Solanki 2007, Krucker & Benz 1998, Parnell & Jupp 2000).

Thus, if nano-flare heating is taking place within loops, then multiple sub-resolution strand modeling with a heat input that is episodic in nature should be important. One approach to simulating this scenario is to use a zero-dimensional (0D) hydrodynamic calculation as introduced by Cargill (1994) and later modified by Cargill & Klimchuk (1997, 2004) and Klimchuk & Cargill (2001). These authors devised a semi-analytic, multi-strand model where it is assumed that each strand can be represented by a single temperature and density only. Each strand experiences “impulsive” nano-flare heating in the sense that the heat deposition occurs on timescales much shorter than any plasma cooling time. The heated plasma cools initially by conduction and then later by radiation. Subsequently, a “global loop” is constructed of many (500-5000 say) strands and observables (eg. emission measure) were calculated. The results show that increasing the number of strands in the global loop leads to a slight increase in overall average temperature but the emission measure remains almost unaffected. The model also explains the overdensity of the warm coronal loops (Cargill & Klimchuk, 2004).

Following on from this model, Cargill & Klimchuk (1997) compared the radiative signature of their 0D loop with Yohkoh Soft X-ray telescope (SXT) observations. Observed loop dimensions and radiative losses were used as multi-strand nano-flare model inputs and observables such as temperature, emission measure and filling factors were derived. Their

– 4 –

results show that the model agrees fairly well with very hot loops (T > 4 × 10^6 K) but not for cooler loops (< T ∼ 2 × 10^6 K). Subsequently in Cargill & Klimchuk (2004), the authors study the effect of altering the power law index in their nano-flare energy distributions. Their results show that steeper power law indices (eg. α = 4) changed considerably the emission measure profiles and the value of the filling factor, compared to the flat (α = 0) distribution.

In that regard, Patsourakos and Klimchuk (2005) generate synthetic line intensities from a nano-flare heated hydrodynamic loop simulation. They localise the spatial distribution of the nano-flare events, finding that the resulting TRACE and Yohkoh SXT emission was only affected weakly by the various dominant heat deposition locations. Also, Patsourakos and Klimchuk (2006) stress the importance of predicting line profiles for their nano-flare-heated loop model, indicating that the profile for a hot line (in this case Fe XVII at ≈ 5 MK) should be seen to undergo strong broadening with distinctive enhancements in the line wings.

This current paper extends greatly the above by examining a fully 1D hydrodynamic simulation of a small (10 Mm) loop which consists of 125 individual strand elements. Each strand operates independently in regard to the plasma response along the structure; however, the strands are connected through the frequency distribution of the energy input via small scale heating episodes which follows a power law for a predefined index. The paper is arranged as follows: in Section 2, the numerical model for a single strand is outlined as well as the plasma response to the sudden deposition of a nano-flare sized energy burst. Section 3 constructs a ‘global loop’ consisting of multiple (125) strands where each strand is subjected to several successive impulsive energy bursts. Subsequently, the effect of varying the power law index α is investigated. Finally, Section 4 presents the Discussion and an outline of future work (both through further simulation and possible observations).

2. Single strand model

Consider a 10^9cm = 10 Mm long loop with a cross-sectional radius of ∽ 1.1 × 10^8 cm = 1.1 Mm. Let us assume that this loop consists of 125 individual plasma strands which fill the loop volume (that is, the radius of each strand is 9.6 × 10^6 cm = 0.098 Mm). These strands are thermally independent so that the dynamics of one strand can not affect any other. The evolution of an individual strand in response to a designated heat input are outlined in the following.

– 5 –

2.1. Numerical model of a strand

Given the fact that the solar corona is a highly conducting low-β medium, the magnetic field confines the plasma along flux tubes, and the plasma can be described with one-dimensional hydrodynamics. A Lagrange-remap one-dimensional hydrodynamic code (adapted from Arber et al. (2001)) is employed for the purpose of solving the following time dependent one dimensional differential equations of mass, momentum and energy conservation; Dρ Dt + ρ ∂ ∂s v = 0 (2) ρ Dv Dt = − ∂p ∂s + ρg + ρν ∂^2v ∂s^2 (3) ρ^γ γ − 1 D Dt ( p ρ^γ ) = ∂ ∂s (κ ∂T ∂s ) − n^2Q(T ) + H(s, t) (4)

p = R μ̃ ρT (5)

D Dt ≡ ∂ ∂t + v · ∂ ∂s where ρ, p, n, v and T represent mass density, pressure, particle density, velocity and temperature of the plasma respectively. s is the spatial co-ordinate along the strand (−L < s < L where in this case L = 5Mm) which is assumed to be semi-circular. In Equation (3), g represents the component of the gravity along the semicircular loop; because we are considering a small loop, we assume g to be a constant of value equal to the surface value (2.74 × 10^4 cm s^{−2}) for all points along the loop. γ represents the adiabatic index of the medium, which we consider to be 5/3. κ is the conductivity of the plasma in the direction of s (= 9.2 × 10^{−7}T^{5/2} erg s^{−1} cm^{−1} K^{−1}). R the molecular gas constant (8.3 × 10^7 erg mol^{−1}K^{−1}) and μ̃ is the mean molecular weight with μ̃ = 0.6 mol^{−1}. The coefficient of kinematic viscosity ν is assumed to be uniform throughout the plasma. Q(T ) is the optically thin radiative loss function; we adopt a piecewise continuous function having general form Q(T ) = χT^β, which is based on the work by Rosner, Tucker and Vaiana (1978). H(s, t) is our prescribed spatially and temporally dependent coronal heating term. The coronal loop is assumed to be symmetrical and initially, ∂T ∂s = ∂p ∂s = 0, (6)

– 6 –

at the loop apex (s = 0). The boundary conditions follow as;

T (−L, t) = T (L, t) = T_{ch} = 10^4 K (7) p(−L, t) = p(L, t) = p_{ch} = 0.314 P a (8) at the loop footpoints deep in chromosphere (where T_{ch}, p_{ch} are the chromospheric temperature and pressure respectively). The chromosphere has a depth of 0.4 Mm at each loop leg. At the beginning of the simulation the temperature along the strand is kept at the chromospheric temperature i.e. 10^4 K and the velocity along the strand is kept fixed at zero. The pressure as well as the density is decreased exponentially towards the strand apex; Subsequently; the plasma is gravitationally stratified and higher density plasma at the chromosphere is available for chromospheric evaporation during the simulation.

As we shall see in these simulations, the sudden release of the localised energy bursts will create travelling shock fronts throughout the strand plasma. The Lagrange remap code has been shown to deal very well with resolving these type of fronts (Arber et al. 2001). Thus, an average grid spacing of 0.037 Mm was employed at the central coronal part of the loop; this optimises the simulation in terms of both the resolution required to track the dynamic features in the strand versus a reasonable simulation run time.

2.2. Strand plasma response to a nano-flare

Using the above strand model, let us examine the response of the plasma within the initially cool, evacuated strand to a rapid deposition of localised energy - a nano-flare. Consider the evolution of the plasma temperature and velocity along the strand as shown in Figure (1). Here, the total energy contained within the heating burst is 1.049 × 10^{24} erg. The heating is localised at 2.8 Mm to the right of the strand apex (at s = 0) and occurs over a lengthscale of 0.2 Mm. The event lifetime is 50 seconds (starting at 57.5 seconds after the simulation begins).

After an initial localised raising of the temperature where the energy is deposited, the extra heat is carried away from this site by conduction; eventually the overall strand temperature rises up to over 4 MK. From the velocity snapshots it is clear that, due to sudden heating, a shock front develops (snapshot 58.46 sec and 65.05 sec) that propagates along the strand with a velocity up to over 140 km s^{−1}. As expected from basic acoustic shock front physics, the propagation of the front is also observed in a slight local increase in the temperature. At time 107.5 second, the heating burst is switched off. Sound waves continue

– 7 –

Fig. 1.— Successive snapshots of the strand evolution in temperature (left) and velocity (right) in response to 1.049 × 10^{24} erg of energy deposited at 2.8 Mm to the right of the strand apex (at s = 0).

– 8 –

to bounce back and forth along the strand (reflecting off the high density chromospheric boundary) and eventually the overall temperature begins to decrease, the shock front decays and the plasma velocity declines (to 30 km s^{−1} at 239.63 s).

The main feature of previously described 0D model is that initially, it allows a strand to cool solely by conduction until the ratio of conduction time scale to radiation time scale becomes unity. Thereafter, radiative losses take over. In contrast, the present model keeps both processes active with the dominate cooling mechanism determined automatically when solving the set of hydrodynamic equations. In addition to that the present model is capable of transporting localised extra heat by means of mass flow via enthalpy flux. Thus consider Figure 2 where the strand apex (a) temperature and (b) density are seen to evolve after the nano-flare burst. The density evolution shows clearly that chromospheric evaporation continues to take place up to around 300 s, after that density drops as the plasma condenses back to the chromosphere. In contrast to Figures 1 & 2 in Cargill (1994), there is no sudden switch between cooling timescales. Also, there is some smaller-scale structures due to the flow of material along the loop as the plasma cools; the spatial evolution of this plasma flow is shown already in the Figure 1.

3. Multi-strand model

Consider now a loop as consisting of 125 individual strands where these strands are related through the distribution of the localised energy input across the elements. The localised heat input H(s, t) arising from the deposition of a given amount of energy E over an event lifetime τ are chosen randomly in time with constraints 10^{23}erg ≤ E ≤ 5 × 10^{24}erg and 50s ≤ τ ≤ 150s.

The energy bursts are released within a fixed volume element where the element length is 0.2 Mm. The heating episode location (S_L) can take place anywhere along the strand within the range of −4.5 Mm ≤ S_L ≤ 4.5 Mm, so as to avoid the chromospheric part of the structure.

The overall energy release profile follows a power law given in Equation (1). The larger the value of α, the steeper the slope of the frequency distribution and hence more weight is given to the smallest heating episodes. The total energy input to the global loop remains the same for the following three simulations; namely 4 × 10^5 erg cm^{−2} s^{−1} for a total run time of 1.725 × 10^4 s.

– 9 –

3.1. Case A: α = 0

Firstly, consider a flat frequency distribution (α = 0) where 1750 heating events with energy distributed randomly between 10^{23} and 5 × 10^{24} erg provide the above said amount of total heat input. Each strand experiences on average 14 energy bursts during the simulation. Figure 3 displays a histogram of the size of an event versus the number of times it occurs during the simulation across all strands- generally, there is no preferred weighting towards any heating scale.

Let us examine the evolution of a single strand undergoing multiple heating bursts. The temperature and density evolution at the strand apex of a typical element (the 55th) is shown in Figure 4; several maxima are observed in response to the reoccurring sudden energy release. As examined in Section 2, after an initial heating burst, the localised heat gets distributed by conduction and the strand plasma dissipates the excess heat through radiation unless is heated by another energy event.

However, what Figure 4 does not portray is the effect of the spatial localisation of the heating. Thus, the temperature evolution along a strand is displayed as an image plot in the Figure 5 (top). Each individual heating event can be identified easily as the temperature along the strand increases dramatically (sometimes up to ∼ 9 MK); at other times, the strand plasma is much cooler. Note that, the maximum value of the temperature along the strand might not be at the strand apex.

Figure 5 (bottom) concentrates upon a narrower time range (4800 to 7400 seconds) and displays three specific heat deposition episodes- these are also marked in Figure 4. At (1) an energy release (of 6.88 × 10^{23} erg for the duration of 77.39 s starting at 4985.25 s) occurs at 0.05 Mm away from the strand apex. In contrast to (1), heating event (2) occurs ∼ 3Mm away from the apex and is larger (2.3 × 10^{24} erg released over 83.5 s). At (3), two heating events have occurred close together in time. The first episode (4.8 × 10^{24} erg over 133.5 s at −1 Mm) is released at 7032.25 s while the second (1.26 × 10^{24} erg over 51.2 sec, at 2.8 Mm) is initiated at 7176 s. The evolution of the strand temperature is clear in Figure 5 (bottom, right) heating the plasma to a maximum of ∼ 9 MK. The plasma is still hot (maximum ∼ 6 MK) when the second event occurs which hence does not have such significant impact on rising the temperature once again.

Now consider combining all 125 strands to form a “global loop”. As individual strands are unresolved, the observed temperature has to be affected by the composite emission of all the strands together. Therefore we derive the emission measure weighted temperature (T_{EM} ) as

– 10 –

Fig. 2.— Evolution of strand-apex (a) temperature and (b) density, after a localised energy burst.

Fig. 3.— Case A: a histogram of the size of a heating event versus the number of times it occurs during the simulation across all 125 strands; the distribution has no dominant heating scale size but is relatively uniform.

– 11 –

Fig. 4.— Case A: Apex temperature (top) and density (bottom) evolution of a typical (the 55th) strand.

– 12 –

T_{EM} =

∑_{125} i=1 n^2_i (s, t)dl(s)T_i(s, t) ∑_{125} i=1 n^2_i (s, t)dl(s) (9) where dl(s) is the grid resolution.

Figure 6 (top left) displays T_{EM} at the loop apex. Neglecting for the moment the larger drops in T_{EM} and the initial few hundred seconds as the simulation begins, the overall T_{EM} fluctuates around 1.6 MK with an amplitude ∼ 0.4 MK. The very low values of T_{EM} are due to how this weighted temperature is being calculated. We can see that if the density in any given strand increases dramatically, then from Equation (9), T_{EM} will be dominated by the temperature of that strand. Subsequently, Figure 6 (top right) displays the average apex density evolution over the 125 strands; there is a high correlation between the sharp increase in density and the sudden changes in T_{EM} . Figure 6 (bottom) shows an image plot of T_{EM} along the loop together with an enlarged time window around 5000s, concentrating on the propagation of a particular T_{EM} dip.

To understand better these sharp drops in the calculated T_{EM} , let us concentrate upon a typical dip at around 5000s. A reasonably sized heating event takes place in “strand 11” of the simulation. This strand has had enough time to relax to a cool (∼ 10^4K), evacuated (∼ 10^9 cm^{−3}) structure after a previous heating burst which occurred in the strand at ∼ 3000s. It is heated again at 4904.75s with an energy burst that lasts 113.5s, contains 1.414 × 10^{24}erg of energy and is located at 3.75Mm on the right hand side of the strand.

The detailed dynamic evolution that arises from this event can be seen in Figure 7. It is very clear that soon after the episodic heating event, a travelling front develops rapidly from the energy release site. The reason for this drop in the T_{EM} at the loop apex is due to a low temperature “blob” travelling along the structure as shown in Figure 7 (bottom right).

The local temperature rises up to 3MK with plasma being compressed ahead of the wave front. This localised cool plasma blob journeys along the strand just ahead of the corresponding increased temperature front. Subsequently, 125s after the initial heating burst, the dense plasma front reaches the apex of the strand while at that particular instant, the local temperature is still chromospheric. Thus for this short time (∼ 10s) the calculated T_{EM} will produce a rapid dip. After the front passes the apex, the temperature at that location rises to coronal values. Eventually the plasma blob travels down the other strand leg, assisted by gravity.

Similar phenomenon can be observed in other strands. It appears that the development of such travelling cool plasma blobs depends on the density structure along the strand prior to the energy release as well as the location and energy content of the event itself. For example,

– 13 –

if a heating burst is initiated when the plasma is already hot and less dense, these plasma blobs do not form. Note that these events are identical to the formation and propagation of cold plasma blobs observed in the simulation by Mendoza-Briceño et al. (2005), who term their events microspicules.

Interestingly, these sudden dips in T_{EM} at a particular location in the loop could have observational implications. It could be the case that a loop could “disappear” from coronal emission and appear in transition or chromospheric ones (Schrijver, 2001; O’Shea, Banerjee, Doyle, 2007). However, it must be noted that although this phenomena consists of a flow of cold plasma along a strand, it can not be termed as classical catastrophic cooling as is analysed theoretically by, say, Karpen et al.(2001) and Müller, Hansteen & Peter(2003)

3.2. Case B: α = 2.29

After investigating Case A where the occurrence rate for all heating events has equal weighting, consider Case B where the power law index from Equation (1) is α = 2.29 (an energy event histogram similar to Figure 3 is displayed in Figure 8a). Since we are requiring that the same total amount of energy is deposited during this simulation as in Case A, the total number of individual events occurring will increase; subsequently 7125 heating episodes take place with each strand experiencing on average 57 events.

There are a number of aspects to note. Firstly there are fewer low T_{EM} dips in Figure 8 (b) compared to Figure 6 (top left), the corresponding density evolution is also shown in Figure 8 (c). Secondly, the mean T_{EM} in time has increased to ∼ 2.2 MK with a reduced fluctuation (∼ 0.1 MK) around this value. To explain this behaviour compared to Case A, consider once again the response of an individual strand to more numerous but less energetic bursts; this is shown for the apex temperature of a typical strand in Figure 9. We can see clearly that the strand plasma is rarely provided with the opportunity to cool sufficiently before another heating burst arrives. Thus the condition for producing the cool plasma blobs is also rare (and hence the number of T_{EM} dips at the apex is also greatly reduced). For the same reason, the average strand temperature is increased throughout the simulation and subsequently, the loop temperature T_{EM} from the amalgamation of all strands also rises.

3.3. Case C: α = 3.29

It is instructive to investigate the effect of further increasing the value of α. Figure 10 (a) displays the energy event histogram for α = 3.29. Thus in this case, approximately 21500

– 14 –

events occur with an average of 172 heating episodes per strand.

Once again, Figure 10(b) plots the loop apex T_{EM} ; the mean value has increased slightly to ∼ 2.3 MK compared to Case B. The bigger fluctuations in T_{EM} and density (Figure 10(c)) have disappeared completely. The same arguments for the absence of T_{EM} dips and for this increase in T_{EM} can be employed as outlined under Section 3.2. In particular, the strand plasma does not have adequate time to cool significantly before another heating event takes place. However, given that the energy event sizes are generally much smaller than in A and B, the impact of each event on the change in temperature is reduced. Increasing α further effectively “saturates” the temperature increase and suppresses further the fluctuations within the spatial resolution of this current simulation.

In order to obtain some idea of the “quasi static” thermal profile along the loop, a simple average T_{EM} profile of 125 strands is derived and the cumulative effect of combining the plasma strands over a “typical” 5000s period (from 5000 to 10000 s) is shown for left hand side of the loop in Figure 10 (d). The “usual” overall thermal structure for a hot apex, cool footpoint loop is recovered. Figure 10 (d) also compares this profile with two static equilibrium thermal profiles produced by the model outlined in Aschwanden and Schrijver (2002). For that particular calculation, we use a loop length of 10 Mm and employ the apex temperature of the nano-flare heated thermal profile as a model input parameter. Note that the Aschwanden and Schrijver (2002) model has a heat input that is constant in time and that we choose to have a heating scale length that is much longer than the overall loop length, i.e., the heat input is virtually spatially uniform. In static loop profile 1, a chromosphere of length 0.4 Mm is used- this matches the same chromosphere as employed initially in the nano-flare model. In static loop profile 2, a chromosphere of length 0.9 Mm is chosen as at this location, the nano-flare model thermal profile begins to level off at 10^4 K. Static loop profile 1 follows well the nano-flare thermal structure in the “coronal part” of the loop; however after −2.7 Mm, its temperature values are higher than the nano-flare model. Static profile 2 is not a good fit to the nano-flare model- from the common apex temperature, profile 2 deviates quickly from the nano-flare case, giving lower temperature values to −3.8 Mm and higher values in the leg. However it is to be noted that overall difference between nano-flare heated quasi static loop profile and the static loop profile 2 would be indistinguishable from current observational stand point. Similarly, although static loop profile 1 shows significant difference from the quasi static profile over ∼ 1 Mm segment at the footpoint of the loop, considering the ambiguity of observing the loop footpoints, this difference as well could be unnoticed at the present instrumental resolution.

– 15 –

Fig. 5.— Temperature evolution of strand 55: (top) the complete evolution for the simulation; (bottom) a close-up of 4800 to 7400 s displaying the thermal response to a number of distinct heating events.

– 16 –

Fig. 6.— Time evolution for 125 strands: (top left) loop apex T_{EM} ; (top right) corresponding loop apex density evolution; (bottom) image plot of the T_{EM} along the loop, together with a zoomed narrow time window around 5000s.

– 17 –

Fig. 7.— Spatio-temporal description of the plasma blob evolution along strand 11; (top left) temperature contour before and after the dramatic event; (top right) density contour for the same time period; (bottom left) temperature profile at three different snapshots; (bottom right) density profile at the same time snapshots.

– 18 –

Fig. 8.— (a) Energy histogram fitted with a straight line, to show the power law slope has a value of α = 2.29; (b) corresponding loop apex T_{EM} evolution; (c) Corresponding loop apex density evolution.

– 19 –

4. Discussion and future work

This paper has outlined a multi-strand hydrodynamic model of a short (10 Mm) plasma loop undergoing sporadic, localised heating. During the simulations undertaken, the total energy deposited in the loop is constant while the distribution of this energy throughout the 125 individual strands follows a power law as outlined in Equation 1. The results show that even though any given strand can evolve through a series of many heating and cooling cycles, the resultant “global loop” thermal profile can appear relatively uniform (eg Figures 6top left, 8b and 10b). Increasing the value of the power law index (α) in Equation 1 (from 0 to 2.29 to 3.29), increases the subsequent mean loop apex temperature though, at the current simulation resolution, this temperature value saturates if α is increased further.

Note that for computational expediency, these investigations have considered a short 10 Mm loop with the limited filamentation of N_s = 125 strands. If the number of strands was increased further (N_s > 125), the total volume occupied per strand would decrease. Concentrating upon Case B (α = 2.29), if the total energy deposition into the loop throughout the simulation remains fixed and the lower energy range cut-off (E_{low}) does not change (from Figure 3 that is set currently at E_{low} = 10^{23} erg), then the number of events per strand will decrease but the “energy density per event per strand” will increase. That is, although there would be less events occurring per strand throughout the simulation time, the impact on the temperature evolution will be greater due to the reduced individual strand volume. Cargill (1994) found that for the 0-D model, increasing N_s leads to a slight overall increase in average loop temperature. Further investigations are underway to quantify fully the effect of altering N_s in this hydrodynamic model.

Also, if the overall global loop is lengthened, then subsequently longer strands will have longer conductive cooling times. However, the total energy deposited within the complete simulation time frame would need to increase accordingly (approximately tenfold for a 100Mm loop) to be able to raise the temperature of the longer strands to values comparable to this current simulation. Considering Case B once again, this could be achieved with this specific power law index by either (i) keeping the original energy range (of 10^{23} to 5 × 10^{24} erg) fixed over which the events can occur but simply allowing an increased number of each event size to take place; or (ii) widening the event range so that many, much smaller events (< 10^{23} erg) and a few much larger events (> 5 × 10^{24} erg) can happen. It is difficult to estimate fully the impact of each of these different “energy scenarios” on the overall plasma evolution. For the former, it could be envisaged that the resulting thermal evolution, average apex temperature and apex temperature variation would be quite similar to that already outlined in Case B. For the latter, the extension to much smaller, more numerous energy events, would mean that the plasma reacts similar to Case C (a slightly raised apex temper-

– 20 –

ature compared to (i) and a reduced apex temperature variation). Once again, simulations are being undertaken to examine the consequences on longer loop structures.

Also it would be useful to forward fold the plasma parameters through the instrument response functions of say, TRACE and Hinode XRT. In particular, the high temperature of individual strands that should be observable in the XRT lines could lead to important distinguishing factor for coronal heating diagnostics; in contrast, TRACE EUV emission could come mainly from plasma that is cooling into the passbands. This is where this multi-strand modelling approach has a distinct advantage over the 0D models as the current simulations can be compared directly to the observed dynamics/ signatures along individual loop structures. These aspects will be tackled thoroughly in a future paper.

5. Acknowledgments

This work was supported by a Science and Technology Facilities Council Standard Grant (PP/C502506/1). The authors wish to thank T. Arber for providing the original welldocumented Lagrange-remap numerical code and the referee for helpful and constructive suggestions on improving the manuscript.

REFERENCES

Arber, T. D., Longbottom, A. W., Gerrard, C. L., Milne, A. M. 2001, JCoPh., 171, 151

Aschwanden, M. J., Nightingale, R. W., Alexander, D. 2000, ApJ, 541, 1059

Aschwanden, M. J., Schrijver, C. J. 2002, ApJS, 142, 269

Cargill, P. J. 1994, ApJ, 422, 381

Cargill, P. J., Klimchuk, J. A. 1997, ApJ, 478, 799

Cargill, P. J., Klimchuk, J. A. 2004, ApJ, 605, 911

Hudson, H. 1991 Sol. Phys., 133, 357

Karpen, J. T., Antiochos, S. K., Hohensee, M., Klimchuk, J. A., MacNeice, P. J. 2001, ApJ, 553, L85

Klimchuk, J. A., Cargill, P. J. 2001, ApJ, 553, 440

– 21 –

Krucker, S., Benz, A. O. 1998, ApJ, 501, L213 Lenz, D. D., Deluca, E. E., Golub, L., Rosner, R., Bookbinder, J. A. 1999, ApJ, 517, L155 Mendoza-Briceño, C. A., & Erdélyi, R. 2006,ApJ, 648, 722 Müller, D. A. N., Hansteen, V. H., and Peter, H. 2003, A&A, 411, 605 O’Shea, E. , Banerjee, D. , Doyle, J. G. 2007, A&A, 475, L25 Parker, E. N. 1988, ApJ, 330, 474 Parnell, C. E., Jupp, P. E. 2000, ApJ, 529, 554 Patsourakos, S., Klimchuk, J. A. 2005, ApJ, 628, 1023 Patsourakos, S., Klimchuk, J. A. 2006, ApJ, 647, 1452 Pauluhn, A., Solanki, S. K. 2007, ApJ, 462, 311 Peres, G. 2000, Sol. Phys., 193, 33 Reale, F., Peres, G. 2000, ApJ, 528, L45 Rosner, R., Tucker, W., Vaiana, G. 1978, ApJ, 220, 643 Schmelz, J. T., Scopes R. T., Cirtain J. W., Winter H. D., & Allen J. D. 2001, ApJ, 556, 896 Schrijver, C. J. 2001, Sol. Phys., 198, 325 Ugarte-Urra, I., Winebarger, A. R., Warren, H. P. 2006, ApJ, 643, 1245 Walsh, R. W., Bell, G. E., Hood, A. W. 1995, Sol. Phys., 161, 83 Warren, H. P., Winebarger, A. R., Hamilton, P. S. 2002, ApJ, 579, L41 Warren, H. P. 2006, ApJ, 637,522 Winebarger, A. R., Warren, H. P., Mariska, J. T. 2003, ApJ, 587, 439

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 22 –

Fig. 9.— Case B: Apex temperature evolution of a single strand when the power law slope is −2.29.

– 23 –

Fig. 10.— (a) Energy histogram fitted with a straight line, to show the power law slope has a value of α = 3.29; (b) corresponding loop apex temperature evolution; (c) corresponding loop apex density evolution; (d) A comparison between nano-flare heated quasi-static halfloop temperature (T_{EM} ) profile and the static equilibrium temperature profile (Aschwanden, Schrijver (2002).