arXiv:0810.1844v1 [astro-ph] 10 Oct 2008

Mon. Not. R. Astron. Soc. 000, 000–000 (0000) Printed 19 November 2018 (MN L^ATEX style file v2.2)

INTEGRAL/IBIS and Swift/XRT observations of hard cataclysmic variables

R. Landi^{1⋆}, L. Bassani^1, A.J. Dean^2, A.J. Bird^2, M. Fiocchi^3, A. Bazzano^3, J.A. Nousek^4, and J.P. Osborne^5

1 INAF – IASF Bologna, Via P. Gobetti 101, I–40129 Bologna, Italy 2 School of Physics and Astronomy, University of Southampton, SO17 1BJ, Southampton, UK 3 INAF – IASF Rome, Via Fosso del Cavaliere 100, I–00133 Roma, Italy 4 Department of Astronomy and Astrophysics, Pennsylvania State University, University Park, PA 16802 5 University of Leicester, University Road, Leicester, LE1 7RH, UK

ABSTRACT

The analysis of the third INTEGRAL/IBIS survey has revealed several new cataclysmic variables, most of which turned out to be intermediate polars, thus confirming that these objects are strong emitters in hard X-rays. Here we present high energy spectra of all 22 cataclysmic variables detected in the 3rd IBIS survey and provide the first average spectrum over the 20–100 keV band for this class. Our analysis indicates that the best-fit model is a thermal bremsstrahlung with an average temperature of < kT > ∼22 keV. Recently, eleven (ten intermediate polars and one polar) of these systems have been followed-up by Swift/XRT (operating in the 0.3–10 keV energy band), thus allowing us to investigate their spectral behaviour over the range ∼0.3– 100 keV. Thanks to this wide energy coverage, it was possible for these sources to simultaneously measure the soft and hard components and estimate their temperatures. The soft emission, thought to originate in the irradiated poles of the white dwarf atmosphere, is well described by a blackbody model with temperatures in the range ∼60–120 eV. The hard emission, which is supposed to be originated from optically thin plasma in the post-shock region above the magnetic poles, is indeed well modelled with a bremsstrahlung model with temperatures in the range ∼16–33 keV, similar to the values obtained from the INTEGRAL data alone. In several cases we also find the presence of a complex absorber: one totally (with N_H ∼ (0.4 − 28) × 10^{21} cm^{−2}) and one partially (with N_H ∼ (0.7 − 9) × 10^{23} cm^{−2}) covering the source. Only in four cases (V709 Cas, GK Per, IGR J06253+7334 and IGR J17303–0601), we find evidence for the presence of an iron line at 6.4 keV. We discuss our findings in the light of the systems parameters and cataclysmic variables/intermediate polars modelling scenario.

Key words: stars: novae, cataclysmic variables — gamma-ray: observations — X-ray: binaries

1 INTRODUCTION

Cataclysmic variables (CVs) are close binary systems, with orbital period typically less than one day, containing a white dwarf (WD) which is accreting material from a late-type main sequency secondary star filling its Roche lobe (for a review see Warner 1995). As the accreting matter falls onto the WD, it forms a disk; the infalling matter releases its gravitational energy, heating the accretion disk and the regions where matter falls onto the WD. As a result, radiation

⋆ E-mail:landi@iasfbo.inaf.it is emitted over many frequencies, from infrared to X-rays. Recently, this class of binaries has re-gained interest because of their detection in large numbers at energies above 20 keV, where very few cases were previously known thanks to RXTE (Suleimanov et al. 2005) and BeppoSAX (De Martino et al. 2004b) observations. CVs can be broadly divided into two subclasses: non magnetic and magnetic objects depending on the strength of the WD magnetic field.

In non-magnetic CVs (e.g. Dwarf Novae or DNe) the hard X-ray emission originates from the boundary layer between the accretion disk and the WD surface and depends on the mass accretion rate (Ṁ) of the disk (Pringle & Savonije

© 0000 RAS

2 R. Landi et al.

1979). This boundary can release up to 50% of the total accreting energy when the material decelerates on to the WD surface. For low Ṁ (≲ 10^{16} g s^{−1}) the boundary is optically thin and emits hard X-rays with temperatures up to 10^8 K. For high accretion rate (≳ 10^{16} g s^{−1}) the boundary layer is thick, thus suppressing hard X-rays and emitting mostly in soft X-rays with temperature ∼10^5 K (Pringle & Savonije 1979).

Magnetic cataclysmic variables (mCVs) are divided in two classes: polars (or AM Her type) and intermediate polars (IPs or DQ Her type). In polars (for a review see Cropper 1990) the magnetic field is so strong (B > 10^7 Gauss, De Martino et al. 2004a) that it forces the WD to spin with the same period of the binary system (Prot,WD = P_{orb}) and preventing the formation of an accretion disk around the WD. The infalling material is chanelled by the magnetic field along its lines and falls on the magnetic poles of the WD. In the IPs, instead, the weaker magnetic field (B ∼ 10^6 − 10^7 Gauss, De Martino et al. 2004a) does not synchronize the spin period of the WD with the orbital period of the binary system (Prot,WD < P_{orb}). In these objects, the accretion process is through a disk , which is truncated in its inner region because of the interaction with the WD magnetosphere; the overall result is the formation of an accretion curtain rather than a converging stream. In these systems, it is also likely that part of the material from the companion can flow directly on the magnetic poles without passing through the disk (disk-overflow, Hellier 1991).

In magnetic CVs the broad-band X-ray spectrum is mainly due to the superposition of a soft and a hard component. The hard X-ray emission is the consequence of the shock produced in the accreting material as it impacts the WD atmosphere. The hot post-shock region cools via thermal bremsstrahlung process emitting hard X-rays; the temperatures of the post-shock region are typically in the range ∼5–60 keV (Warner 1995; Hellier 2001). This emission is highly absorbed (NH ∼ 10^{23} cm^{−2}) within the accretion flow (Ishida et al. 1994) and is expected to be reflected by the WD surface (De Martino et al. 2004b and references therein). In polars, due to the strong magnetic field, cyclotron radiation cooling suppresses the high temperature bremsstrahlung emission of a substantial fraction of the electrons in the shock region (Lamb & Masters 1979; König, Beuermann & Gänsicke 2006). This may explain why most of hard X-ray detected CVs are IPs, in which cyclotron emission is negligible.

The soft X-ray component, originating by the reprocessing of the hard emission on the WD surface, is typically described by a blackbody emission with temperatures ranging from a few eV up to ∼100 eV (De Martino et al. 2004, 2006a,b). This component was mostly seen in polars but recently Evans & Hellier (2007), performing a systematic spectral analysis of XMM-Newton data of IPs, found this to be a common feature of IPs X-ray spectra. Furthermore, these authors suggest that the lack of a blackbody component in some of these systems is to be ascribed to geometrical effects: the accretion polar regions are either widely hidden by the accretion curtain or are only visible when foreshortened on the WD limb (depending on the inclination of the system).

Thanks to INTEGRAL observations strategy, a large number of new CVs have now been detected and classified through optical spectroscopy (Masetti et al. 2006,2008; Bikmaev et al. 2006; Gänsicke et al. 2005). In the third INTE- GRAL/IBIS survey, 22 CVs are reported, confirming this class of binaries to be strong emitters in hard X-rays. In this paper we present IBIS spectral analysis of the entire sample of CVs detected by INTEGRAL. For eleven systems, which have been observed by Swift/XRT, we also report the broad-band (∼0.3–100 keV) analysis by combining not simultaneous XRT and IBIS data. A detailed investigation of the temporal properties and of the spectral behaviour of the pulsations (i.e. the spectral analysis at the maximum and minimum of the pulse cycle) is beyond the aim of this paper. Therefore, here we only present the spectral analysis of the phase-averaged spectra.

2 OBSERVATION AND DATA ANALYSIS

2.1 INTEGRAL

The INTEGRAL data reported here consist of several pointings performed by the IBIS/ISGRI instrument (Ubertini et al. 2003) between revolution 12 and 429, i.e. the period from launch to the end of April 2006. ISGRI images for each available pointing were generated in various energy bands using the ISDC offline scientific analysis software OSA v. 5.1 (Goldwurm et al. 2003). Count rates at the position of the source were extracted from individual images in order to provide light curves in various energy bands; from these light curves, average fluxes were then obtained and combined to produce an average source spectrum (see Bird et al. 2007 for details). Spectra were produced in nine energy bins over the 20–100 keV band. An appropriately re-binned rmf file was also produced from the standard IBIS spectral response file to match the pha file energy bins. Here and in the following, spectral analysis was performed with XSPEC v. 11.3.2 package (Arnaud 1996) and errors are quoted at 90% confidence level for one interesting parameter (Δχ^2 = 2.71).

In Table 1 we list all 22 CVs detected so far by IN- TEGRAL together with their position and classification. As can be seen, this sample contains mainly magnetic systems (21 objects), with the majority (∼81%, or 17 versus 4) being IPs (10 systems confirmed and seven possible/probable IP candidate, as reported in Table 1). Only one system (SS Cyg) is classified as DNe.

To characterise the hard X-ray emission (20–100 keV) of these systems, we fit the IBIS spectra with two models, a simple power law and a thermal bremsstrahlung. The results of these fits are reported in Table 1, where Γ, kT , 20–100 keV flux (assuming a bremsstrahlung model) and χ^2/ν relative to both models are listed for each source. Generally, both models provide an acceptable fit, although in a few cases the bremmsstrahulung gives a better χ^2/ν. Inspection of Table 1 also indicates that there are no significant differences between the spectral parameters of the different classes of CVs. The photon index and temperatures distributions (shown in Figure 1 and Figure 2) peak at Γ = 2.9 ± 0.5 and kT = 26.0 ± 11.0 keV, respectively, in substantial agreement with what reported previously by Barlow et al. (2006) for a subsample. Thus, in order to improve the statistics, we fitted together all data sets allowing the flux to vary from source to source, but imposing the slope and the bremsstrahlung

INTEGRAL/IBIS and Swift/XRT observations of hard cataclysmic variables 3

temperature to be the same for all objects. These fits yield a temperature of kT = 22.0 ± 0.9 keV and a photon index Γ = 2.96±0.05, much in agreement with the mean values estimated from Figure 1 and Figure 2. Comparison of the χ^2/ν strongly suggests that the thermal bremsstrahlung is the model that better reproduces the data (χ^2/ν = 272.6/175) with respect the power law (χ^2/ν = 307/175); this is reflected in the residuals to the models which are shown in Figure 3 and Figure 4. This result supports the hypothesis that the hard X-ray emission is due to a thermal bremsstrahlung component.

2.2 Swift/XRT

For eleven sources in our sample, we also have X-ray observations acquired with the XRT (X-ray Telescope, 0.2– 10 keV, Burrows et al. 2005) on board the Swift satellite (Gehrels et al. 2004). XRT data reduction was performed using the XRTDAS standard data pipeline package (xrtpipeline v. 0.10.6), except for the observations performed after August 2007 (in these cases we used the latest version 0.11.6 of the pipeline), in order to produce screened event files. All data were extracted only in the Photon Counting (PC) mode (Hill et al. 2004), adopting the standard grade filtering (0–12 for PC) according to the XRT nomenclature. The log of all X-ray observations, available at June 2 2008, is given in Table 2. For each measurement, we report the XRT observation date, the total on-source exposure time and the total net count rate in the 0.3–10 keV energy band.

For those sources in which the XRT count rate was high enough to produce event pile-up, we extracted the events in an annulus centered on the source, by determining the size of the inner circle according to the procedure described in Romano et al. (2006). In the other cases, events for spectral analysis were extracted within a circular region of radius 20^{′′}, centered on the source position, which encloses about 90% of the PSF at 1.5 keV (see Moretti et al. 2004).

The background was taken from various source-free regions close to the X-ray source of interest, using circular regions with different radii in order to ensure an evenly sampled background. In all cases, the spectra were extracted from the corresponding event files using the XSELECT software and binned using grppha in an appropriate way, so that the χ^2 statistic could be applied. We used version v.009 of the response matrices and create individual ancillary response files arf using xrtmkarf v. 0.5.6.

We summed together all the available observations for each source to provide an average source spectrum as done for the INTEGRAL/IBIS data. A posteriori, this approach proved resonable since only in two cases (V709 Cas and GK Per) we observed significant changes in flux, by a factor of 1.5 and 1.7 respectively, but not in shape.

3 THE BROAD-BAND SPECTRAL ANALYSIS

Use of broad-band data is particularly important to determine the properties of the emitting regions, in particular the temperature of the optically thin plasma, the presence of interstellar and/or circumstellar absorption; it is also useful to study the effects of reprocessing of the hard X-ray emission on the WD surface. The basic model we adopted consists of a blackbody (kTBB) and a bremsstrahlung (kTBrems) component to account for the soft and hard X-ray emissions expected in magnetic CVs, plus two cold media consisting of a simple absorber, totally covering the source (with a column density NH) and a partial covering absorber (with a column density N_{H(pc)} and covering factor CF). If required by the data, we also included in the model another emission component consisting of an optically thin plasma (MEKAL code in XSPEC) and a Kα iron line. We also tested the data for the presence of a multi-temperature structure of the post-shock region and of a reflection component, but the data were of too low statistical quality to allow these more complex fits. We introduced in the fitting procedure a cross-calibration constant (C_{calib}) to account for possible mismatch between XRT and IBIS data as well as for source flux variations. The results of the spectral fits including cross-calibration constant and reduced χ^2 are all listed in Table 3; spectra and residuals with respect to the best-fit model are plotted in Figure 5. We found that in most cases our basic model provides a good description of the broad-band spectra of our CVs. The cross-calibration constants have been found to be consistent, within the uncertainties, with unity for all sources apart from GK Per, in which the low value of the constant can be ascribed to the flux variability of the source, as confirmed by XRT (this work) and previous observations (Vrielmann, Ness & Schmitt 2005 and references therein). Three systems out of eleven (XSS J12270-4859, IGR J16500– 3307 and IGR J17195–4100) do not show evidence for complex absorption, but this could be due to the short exposure of the XRT observations. In eight cases (V709 Cas, IGR J06253+7334, XSS J12270–4859, IGR J14536–5522, IGR J15479–4529, IGR J16167–4957, IGR J17195–4100 and IGR J17303–0601) the column density of the fully covering absorber is lower or compatible with the Galactic absorption in the direction of the sources, suggesting an interstellar origin for this component. For systems showing the partial covering absorption, we found that the absorber is remarkably higher than the galactic one, indicating an intrinsic origin likely associated to the presence of the accretion material along the line of sight. The range of values found for both total and partial absorber are consistent with what found by Evans & Hellier (2007) by analysing the XMM-Newton data of several IPs^1. Only in four cases (V709 Cas, GK Per, IGR J06253+7334 and IGR J17303-0601) we find evidence for the presence of an iron line at around 6.4 keV; lack of iron line detection in the other sources may be due to the lower statistical quality of their X-ray data.

An interesting result of our analysis is that most of the IPs of our sample significantly require a blackbody component (see Table 4); the temperatures related to this component are all in the range 60–120 eV as observed in previous studies (Evans & Hellier (2007); De Martino et al. 2001,2004b,2006b,2008). Following Evans & Hellier (2007), we would not expect to observe a blackbody component if the partial covering absorption is associated to the accretion curtain; however, in our case the blackbody emission does not seem to be affected by the strength of the partial ab-

1 The reader should note that the partial covering model is likely due to time averaging of a variable absorption as the WD and/or orbit rotate.

4 R. Landi et al.

sorber and is observed in all CVs. The fact that in FO Aqr we can determine the blackbody temparature, while Evans & Hellier (2007) do not, may be related to our broad-band analysis which allows a better definition of the source continuum and an estimate of the soft component temperature. A bremmsstrahulung component is required in every object and its temperature ranging from 16–35 keV, is generally consistent with values obtained using IBIS data alone.

4 NOTES ON A FEW INDIVIDUAL SOURCES

V709 Cas: in this case our results are in agreement with what found by Falanga et al. (2005) from a joint JEM- X/ISGRI spectrum. We confirm a temperature for the hard X-ray emission at around 25 keV, without claiming the presence of a reflection component as instead reported by De Martino et al. (2001), even if we fit the data assuming their model. In this case the data shows an excess at around 6.4 keV, that we modeled by adding an iron line to the basic model (see Table 3). The addition of this component is required by the data at 99.99% confidence level and provides an energy centroid E = 6.46^{+0.05}_{−0.04} keV and an EW = 140^{+46}_{−55} eV, which is consistent with the value reported by De Martino et al. (2001).

GK per: a recent analysis of XMM-Newton data of GK Per has revealed the presence of spectral complexity in the soft energy band, which has been resolved in a multitude of emission lines thanks to the high-resolution spectroscopy performed with the RGS (Vrielmann et al. 2005). Furthermore, the image of the source taken with the ACIS-S detector on board Chandra, reported by the same authors, shows the presence of extended emission (a shell with a radius of ∼50 arcsec) around the source, which disappears above ∼1.5 keV. With the XRT data we cannot evaluate the contribution of this component to the total emission, therefore we decided to perform the spectral analysis above ∼1 keV. The fit with the basic model is not satisfactory (χ^2/ν = 693.2/502): the residuals to the model show a clear excess of counts around ∼6 keV. The iron Kα region of this source has been recently resolved by Chandra in three distinct components (6.4, 6.7 and 6.97 keV, Hellier & Mukai (2004)), with the fluorescent line showing a red wing up to 6.33 keV. This last component has been confirmed by XMM-Newton observations (Vrielmann et al. 2005). In our analysis, the addition of a Gaussian Fe Kα line is strongly required by the data (> 99.99%, Δχ^2 = 183 for three degrees of freedom) and gives an energy centroid E = 6.35^{+0.05}_{−0.03} keV, a line width σ = 0.29^{+0.05}_{−0.04} keV and an equivalent width EW = 371^{+59}_{−53} eV, in agreement with what reported by Vrielmann et al. (2005). The confidence contours of the line energy versus line width are shown in Figure 6. Unfortunately, because of the low sensitivity of XRT in this energy band, we cannot further resolve this spectral region to verify the presence of other lines and/or of a red wing in the neutral iron line. IGR J06253+7334: in this case, although the basic model provides a good description of the data (χ^2/ν = 111.8/121), an excess at around 6.4 keV is clearly evident. The addition of a narrow Gaussian line at 6.4 keV is required by the data at 99.5% confidence level (Δχ^2 = 7.3 for one degree of freedom) and provides an EW = 195^{−108}_{+115} eV (see Table 3). By leaving the iron line energy free to vary, we found an energy centroid E = 6.41^{+0.06}_{−0.04} , a similar EW , but a lower significance of the line (98.4% confidence level). Concerning the temperature of the bremsstrahlung component, we found a difference between the value found by fitting the IBIS data alone (∼7 keV) and that found in the broad-band spectral analysis (∼35 keV). This discrepancy could be due to a source variation between XRT and IBIS observations, or perhaps it was the use of a more complex model which resulted in the different parameter value.

IGR J17303–0601: also for this source the basic model does not reproduce satisfactorily the spectrum (χ^2/ν = 358/292). The addition of a further emission component consisting of an optically thin plasma (MEKAL code in XSPEC) improves the fit (Δχ^2 = 38 for two degrees of freedom) and is significant at 99.99%, giving a temperature kT = 0.20^{+0.03}_{−0.02} keV. The addition of a narrow Gaussian line at 6.4 keV to account for the excess at around 6 keV is only marginally required by the data (∼95%) and provides an EW = 83^{+60}_{−65} eV. Our results are consistent with those recently reported by De Martino et al. (2008) from a combined analysis of XMM-Newton and INTEGRAL data, except for the temperature of the hard X-ray emission (which is lower in our fit than in theirs) and the metal abundances, which we freeze to the solar value because of the lack of statistics.

5 DISCUSSION

We have analysed INTEGRAL data of a sample of 22 hard X-ray selected CVs, the majority of which are IPs. We confirm previous indications that the high energy spectra of these type of objects are well described by either a bremsstrahlung model with kT in the range 7–56 keV or a power law with Γ in the range 2.1–3.5; however, the average INTEGRAL spectrum of all 22 CVs is significantly better fitted by the bremsstrahlung model with an average temperature of 22 keV. Confirmation that IPs are the most powerful soft gamma-ray emitters within the CV population is an important result defined from INTEGRAL observations. The lack of emission above a few tens of keV from a large set of non-magnetic white dwarf binaries and synchronised polars is also an interesting information. For non-magnetic CVs the non detection of high energy emission could be related to the lack of radial accretion flow. Instead, the fact that IPs are high energy emitters and polars are not suggests that the onset of emission above 10 keV requires some level of synchronisation of the orbital and spin periods, but then the high energy radiation is less likely to be observed when full synchronisation sets in. One would then expect to observe some level of correlation between the characteristics of the soft gamma-ray emission and the degree of synchronisation. In Table 5 we report for each source in the complete sample of CVs those parameters which characterise the system; data are obtained from the literature^2 (see references in Table 5) and include the orbital and spin periods and their ratio, the WD mass and the source distance. Not all sources are fully characterised and in the cases of newly discovered INTEGRAL sources data are often unavailable. As

2 For semplicity, for many of our sources, we refer to the work of Barlow et al. 2006, which contains all the original references; similar information can also be found in Ritter & Kolb (2003).

INTEGRAL/IBIS and Swift/XRT observations of hard cataclysmic variables 5

a first step we cross-correlated the bremsstrahlung temperature and 20–100 keV flux as obtained in Table 1 with the various parameters listed in Table 5, but have not found any convincing correlations. In particular, neither of these two gamma-ray parameters cross correlate with the ratio of spin to orbital period: while a wide range (extending from around 0.02 to up ∼1) in the degree of synchronisation is apparent in the sample studied, yet there is a notable similarity in the thermal bremsstrahlung temperatures throughout the sample. It remains to understand how systems which are quite different in various parameters are able to privide such a well confined range of bremsstrahlung temperatures.

Half of the sources in the sample have also X-ray data available so that the low energy emission could be parametrized in terms of a blackbody model with well constrained temperatures in the range 60–120 eV. Extra features to this baseline model have been found in a few sources such as an iron line at 6.4 keV in four sources and an extra thermal component in one object. Both soft and hard components are viewed through two layers of neutral absorbing material: the first seen in all 11 objects totally covers the emitting region, while the second, seen in ∼70% of them, only partially covers the source. We also searched for correlation between the system values and soft X-ray emission parameters but again found none. The measured X-ray (2– 10 keV) and soft gamma-ray (20–100 keV) luminosities are found to span from 10^{32} to 10^{33} erg s^{−1}; their ratios span from 0.02 to 7.5 with an average at around 1.3, but only when GK Per, with a ratio of ∼38, is discounted. GK Per stands out in the sample because it has a considerably longer orbital period than the rest of the group and, by a considerable margin, the highest X-ray to gamma-ray flux ratio. GK Per was a bright nova occurring in 1901 in Perseus and is now classified as an IP. It is possible that the system is still quite young and has not fully switched into the standard IP state as described here; coverage in time would be extremely interesting to see if any change towards a more standard IP behaviour will take place. The bolometric luminosities of the blackbody emitting components have corresponding emitting areas in the range 10^{12} to ∼10^{16} cm^2, with GK Per and FO Aqr located at the top end of the range. From the available values of the WD mass, we estimate that the observed blackbody emitting area covers from ∼3 × 10^{−3} to ∼9 × 10^{−7} of the WD surface.

Finally, it is important to underline that a unique baseline model has been able to describe the broad-band (0.3– 100 keV) data of half the sample of INTEGRAL detected objects. This model is consistent with the standard IP scenario, where thermal emission originating in the irradiated poles of the WD atmosphere provides the soft X-ray component, while emission in the post-shock region above the magnetic poles gives rise to the thermal bremsstrahlung component; this emission is absorbed within the accretion flow and is possibly reflected by the WD surface, hence the production of iron line features. This baseline model can be used as a pointer to IP classification (Ramsay et al. 2008) and considered a signature of such systems within the CVs population.

ACKNOWLEDGMENTS

Based on observations with INTEGRAL, an ESA project with instruments and science data centre funded by ESA member states (especially the PI countries: Denmark, France, Germany, Italy, Switzerland, Spain), Czech Republic and Poland, and with the participation of Russia and the USA. We acknowledge the following funding: in Italy, Italian Space Agency financial and programmatic support via contracts I/088/06/0 and I/008/07/0; in the UK, funding via PPARC grant PP/C000714/1. We acknowledge the use of public data from the Swift data archive.

REFERENCES

Araujo-Betancor, S., Gänsicke, B. T, Hagen, H.–J, Rodriguez-Gil, P., & Engels, D. 2003, A&A, 406, 213 Arnaud K. A. 1996, XSPEC: the first ten years, in Astronomical Data Analysis Software and Systems V, ed. G. H. Jacoby, & J. Barnes, ASP Conf Ser. 101, 17 Barlow, E. J., Knigge, C., Bird A. J., et al. 2006, MNRAS, 372, 224 Beuermann, K., Harrison, Th. E., McArthur, B. E., Benedict, G. F., & Gänsicke, B. T. 2004, A&A, 419, 291 Bird, A. J., Malizia, A., Bazzano, A., et al. 2007, ApJS, 170, 175 Bikmaev, I. F., Revnivtsev, M. G., Burenin, R. A. & Sunyaev, R. A. 2006, Astr. Letters, 32, 588 Bonnet-Bidaud, J.–M., De Martino, D., Falanga, M., Mouchet, M., & Masetti N. 2007, A&A, 473, 185 Bonnet-Bidaud, J.–M., Mouchet, M., De Martino, D., Silvotti, R., & Motch, C 2006, A&A, 445, 103 Burrows, D. N., Hill, J. E., Nousek, J. A., et al. 2005, Space Sci. Rev., 120, 165 Cropper, M. 1990, Space Sci. Rev., 54, 195 De Martino, D., Matt, G. Mukai, K., et al. 2008, A&A, 481, 149 De Martino, D., Matt, G., Mukai, K., Bonnet-Bidaud, J.– M., Burwitz, V., Gänsicke, B. T., Haberl, F., & Mouchet, M. 2006a, A&A, 454, 287 De Martino, D., Bonnet-Bidaud, J.–M., Mouchet, M., Gänsicke, B. T., Haberl, F., & Motch, C. 2006b, A&A, 449, 115 De Martino, D., Matt, G., Belloni, T., Chiappetti, L., Haberl, F., & Mukai, K. 2004a, Nuc. Phys. B Proc. Supp., 132, 693 De Martino, D., Matt, G., Belloni, T., Haberl, F. & Mukai, K. 2004b, A&A, 415, 1009 De Martino, D., Matt, G. Mukai, K., et al. 2001, A&A, 377, 499 Evans, P. E. & Hellier, C. 2007, ApJ, 663, 1277 Falanga, M., Bonnet-Bidaud, J. M. & Suleimanov, V. 2005, A&A, 444, 561 Gehrels, N., Chincarini, G., Giommi, P. et al. 2004, ApJ, 611, 1005 Gänsicke, B. T., Marsh, T. R., Edge, A., et al. 2005, Atel 463 Goldwurm, A., David, P., Foschini, L., et al. 2003, A&A, 411, L223 Hellier, C., & Mukai, K. 2004, MNRAS, 352, 1037 Hellier, C. 2001, Cataclysmic Variables Stars (Springer- Praxis: Chichester)

6 R. Landi et al.

Hellier, C. 1991, MNRAS, 251, 693 Hernanz, M., & Sala, G. 2002, Science, 298, 393 Hill, J. E., Burrows, D. N., Nousek, J. A., et al. 2004, Proc. SPIE, 5165, 217 Ishida, M., Mukai, K, & Osborne J.P. 1994, PASJ, 46, L81 König, M., Beuermann, K., & Gänsicke, B. T. 2006, A&A, 449, 1129 Masetti, N., Mason, E., Morelli, L., et al. 2008, A&A, 482, 113 Masetti, N., Morelli, L., Palazzi, E., et al. 2006, A&A 459, 21 Moretti, A., Campana, S., Tagliaferri, G., et al. 2004, Proc. SPIE, 5165, 232 Norton, A. J., Wynn, G. A., & Somerscales, R. V. 2004, ApJ, 614, 349 Pringle, J. E. & Savonije, G. J. 1979, MNRAS, 187, 777 Ramsay, G., Wheatley, P. J., Norton, A. J., Hakala, P, & Baskill, D. 2008, MNRAS, 387, 1162 Rana, V. R., Singh, K. P., Barrett, P. E., & Buckley, D. A. H. 2005, ApJ, 625, 351 Ritter H. & Kolb U. 2003, A&A, 404, 301 (update RKcat7.10) Romano, P., Campana, S., Chincarini, G., et al., 2006, A&A, 456, 917 Staude, A., Schwope, A. D., Krumpe, M., Hambaryan, V., & Schwarz, R. 2003, A&A, 406, 253 Suleimanov, V., Revnivtsev, M., & Ritter, H. 2005, A&A, 435, 191 Schwarz, R., Schwope, A. D., Staude, A., & Remillard, R. A. 2005, A&A, 444, 213 Ubertini, P., Lebrun, F., Di Cocco, G., et al. 2003, A&A, 441, L131 Vrielmann, S., Ness, J.–U, & Schmitt, H. H. M. 2005, A&A, 439, 287 Warner, B. 1995, Cataclysmic Variables, (Cambridge: Cambridge Univ. Press)

INTEGRAL/IBIS and Swift/XRT observations of hard cataclysmic variables 7

Table 1. Characteristics of the CVs belonging to the third IBIS Survey and their best-fit IBIS parameters by assuming power law and bremsstrahlung models.

Source RA Dec Class^{a,b} Γ χ^2/ν kT_{Brems} χ^2/ν F(20–100 keV)^c (J2000) (J2000) (keV) (10^{−11} erg cm^{−2} s^{−1})

IGR J00234+6141 5.726 +61.706 IP^• 2.18^{+1.24}_{−1.04} 14.0/7 >14 13.8/7 0.6 V709 Cas 7.204 +59.306 IP^• 2.77^{+0.13}_{−0.12} 13.2/7 25.5^{+3.1}_{−2.7} 3.9/7 5.0 GK Per 52.778 +43.934 IP^• 2.21^{+0.84}_{−0.72} 4.6/7 43.7^{+128.8}_{−23.4} 3.6/7 2.1 BY Cam 85.737 +60.850 P 2.40^{+1.08}_{−0.87} 5.4/7 36.7^{+230.3}_{−22.7} 5.9/7 3.2 IGR J06253+7334 96.340 +73.602 IP^• > 3.5 2.2/7 7.0^{+8.9}_{−3.8} 2.2/7 0.7 XSS J12270–4859 187.007 –48.893 IP^{•••} 2.29^{+0.49}_{−0.44} 9.1/7 42.5^{+36.0}_{−15.8} 6.6/7 2.5 V834 Cen 212.249 –45.273 P 3.00^{+1.77}_{−1.28} 6.8/7 18.7^{+61.0}_{−10.6} 6.8/7 0.7 IGR J14536–5522 223.435 –55.374 P 3.58^{+0.61}_{−0.52} 7.1/7 14.0^{+5.4}_{−3.7} 8.1/7 1.4 IGR J15094–6649 227.351 –66.844 IP^{•••} 3.16^{+0.67}_{−0.55} 3.8/7 18.8^{+11.5}_{−6.5} 6.5/7 1.7 IGR J15479–4529 237.050 –45.478 IP^• 2.64^{+0.13}_{−0.12} 29.3/7 29.3^{+3.1}_{−2.7} 6.2/7 6.1 IGR J16167–4957 244.140 –49.974 IP^{•••} 3.28^{+0.27}_{−0.25} 10.5/7 17.3^{+3.3}_{−2.7} 10.0/7 2.3 IGR J16500–3307 252.491 –33.064 IP^{••,d} 3.18^{+0.47}_{−0.40} 18.8/7 20.0^{+6.9}_{−4.7} 14.5/7 1.5 V2400 Oph 258.172 –24.280 IP^• 3.29^{+0.15}_{−0.14} 13.7/7 16.6^{+1.9}_{−1.7} 8.7/7 3.3 IGR J17195–4100 259.906 –41.014 IP^{••} 2.86^{+0.19}_{−0.18} 8.8/7 25.0^{+4.6}_{−3.6} 19.4/7 3.5 IGR J17303–0601 262.596 –5.988 IP^• 2.56^{+0.32}_{−0.29} 7.5/7 32.4^{+12.5}_{−8.1} 8.8/7 4.5 V2487 Oph 262.963 –19.233 IP^{•••} 2.12^{+0.51}_{−0.47} 4.4/7 55.6^{+76.4}_{−24.5} 3.6/7 1.2 V1223 Sgr 283.755 –31.154 IP^• 3.26^{+0.13}_{−0.12} 10.5/7 17.7^{+1.6}_{−1.4} 3.1/7 7.1 V1432 Aql 295.058 –10.428 P 2.82^{+0.56}_{−0.49} 4.8/7 24.4^{+15.3}_{−8.1} 5.1/7 3.4 V2069 Cyg 320.906 +42.278 IP^{••} 3.20^{+0.76}_{−0.60} 4.6/7 19.2^{+12.3}_{−6.8} 4.5/7 1.2 IGR J21335+5105 323.438 +51.121 IP^• 2.91^{+0.25}_{−0.24} 22.0/7 23.6^{+5.0}_{−4.0} 12.4/7 4.1 SS Cyg 325.691 +43.583 DN 3.19^{+0.27}_{−0.25} 2.7/7 18.4^{+3.7}_{−2.9} 4.8/7 3.7 FO Aqr 334.478 –8.317 IP^• 2.70^{+1.28}_{−0.89} 7.5/7 29.7^{+70.1}_{−16.6} 7.8/7 4.2

a IP: intermediate polar; P: polar; DN: dwarf nova;

b The classification of the IP systems is addressed following the Koji Mukai’s IP probability classification (available at http://asd.gsfc.nasa.gov/Koji.Mukai/iphome/catalog/alpha.html):^•: confirmed;^{••}: probable;^{•••}: possible; c The flux is derived by assuming the bremsstrahlung model; d For this source we used the classification proposed by Masetti et al. (2008).

8 R. Landi et al.

Table 2. Log of the Swift XRT observations used in this paper (until June 2, 2008).

Source Obs date Exposure^a Count rate (0.3–10 keV) (s) (counts s^{−1})

V709 Cas Jul 15, 2007 290 0.245 ± 0.029 Jul 17, 2007 1156 0.415 ± 0.019 Nov 04, 2007 3970 0.497 ± 0.011 Nov 04, 2007 3532 0.396 ± 0.011 Nov 05, 2007 2370 0.453 ± 0.014 Nov 14, 2007 2985 0.451 ± 0.012 Apr 07, 2008 5732 0.437 ± 0.009 Apr 08, 2008 1376 0.437 ± 0.020 May 01, 2008 1651 0.430 ± 0.016 Jun 01, 2008 6365 0.492 ± 0.009 total obs – 29427 0.456 ± 0.004

GK Per Dec 20, 2006 3931 0.883 ± 0.015 Dec 26, 2006 4493 0.445 ± 0.010 Jan 02, 2007 4679 0.482 ± 0.010 Jan 09, 2007 4802 0.455 ± 0.010 Jan 19, 2007 5993 0.460 ± 0.009 Jan 23, 2007 5756 0.480 ± 0.009 Jan 30, 2007 966 0.403 ± 0.020 Feb 04, 2007 3921 0.429 ± 0.010 Feb 08, 2007 5229 0.464 ± 0.009 Feb 12, 2007 2956 0.410 ± 0.012 Feb 16, 2007 6131 0.424 ± 0.008 Feb 19, 2007 2787 0.465 ± 0.013 Feb 23, 2007 3226 0.484 ± 0.012 Feb 26, 2007 6346 0.481 ± 0.009 Mar 02, 2007 3132 0.428 ± 0.012 Mar 06, 2007 7765 0.448 ± 0.008 Mar 09, 2007 4185 0.469 ± 0.011 Mar 13, 2007 5869 0.443 ± 0.009 Sep 27, 2007 2470 0.294 ± 0.011 total obs – 84637 0.475 ± 0.002

IGR J06253+7334 Nov 04, 2007 3411 0.114 ± 0.006 Dec 03, 2007 4468 0.114 ± 0.005 Dec 05, 2007 10092 0.123 ± 0.003 Dec 06, 2007 8928 0.084 ± 0.003 total obs – 26899 0.114 ± 0.006

XSS J12270–4859 Sep 15, 2005 4965 0.269 ± 0.007 Sep 24, 2005 1870 0.191 ± 0.010 total obs – 6835 0.251 ± 0.006

IGR J14536–5522 Oct 10, 2005 7165 0.395 ± 0.008 Mar 06, 2006 2040 0.321 ± 0.013 total obs – 9205 0.383 ± 0.007

IGR J15479–4529 Jun 22, 2007 359 0.405 ± 0.034 Jun 24, 2007 3978 0.369 ± 0.010 Jun 26, 2007 1002 0.289 ± 0.017 Jan 25, 2008 4772 0.485 ± 0.010 total obs – 10111 0.430 ± 0.007

IGR J16167–4957 Sep 09, 2005 2434 0.167 ± 0.008 Jan 26, 2006 3087 0.182 ± 0.008 Feb 15, 2007 5189 0.185 ± 0.006 total obs – 10710 0.184 ± 0.004

IGR J16500–3307 Jan 27, 2007 4594 0.136 ± 0.005

INTEGRAL/IBIS and Swift/XRT observations of hard cataclysmic variables 9

Source Obs date Exposure^a Count rate (0.3–10 keV) (s) (counts s^{−1})

IGR J17195–4100 Oct 29, 2005 3474 0.434 ± 0.011 Oct 30, 2005 1588 0.455 ± 0.017 Jun 21, 2007 719 0.400 ± 0.024 Apr 30, 2008 7323 0.462 ± 0.001 May 02, 2008 2727 0.459 ± 0.012 total obs – 15831 0.456 ± 0.005

IGR J17303–0601 Feb 22, 2007 6520 0.369 ± 0.008 Feb 23, 2007 11040 0.398 ± 0.006 Feb 25, 2007 4213 0.461 ± 0.010 Feb 28, 2007 817 0.548 ± 0.026 Mar 02, 2007 2043 0.456 ± 0.015 total obs – 24633 0.411 ± 0.004

FO Aqr May 04, 2006 9939 0.316 ± 0.006 May 04, 2006 3894 0.328 ± 0.009 May 04, 2006 1189 0.256 ± 0.015 May 04, 2006 5454 0.244 ± 0.007 total obs – 20476 0.292 ± 0.004

a Total on-source exposure time.

Table 3. XRT/IBIS spectral analysis results of sources fitted with the basic model (see text). Frozen parameters are written between squared brackets.

Source Energy band N_H N_{H(pc)} C_F kT_{BB} kT_{Brems} F_{2−10 keV} F_{20−100 keV} C_{calib}^a χ^2/ν (keV) (10^{22} cm^{−2}) (10^{22} cm^{−2}) (eV) (keV) (10^{−11} erg cm^{−2} s^{−1}) (10^{−11} erg cm^{−2} s^{−1}) V709 Cas^b 0.3–100 0.23^{+0.10}_{−0.04} 12.0^{+11.0}_{−5.6} 0.28^{+0.07}_{−0.06} 84^{+6}_{−8} 25.6^{+2.7}_{−2.4} 3.1 5.0 1.54^{+0.22}_{−0.22} 325.8/329 GK Per^c 1–100 2.8^{+0.24}_{−0.12} 16.8^{+2.4}_{−1.7} 0.69^{+0.03}_{−0.02} 82^{+6}_{−8} 23.0^{+9.2}_{−6.5} 16.0 2.0 0.12^{+0.07}_{−0.04} 510.5/499 IGR J06253+7334^d 0.3–100 0.06^{+0.10}_{−0.01} 6.7^{+4.7}_{−3.0} 0.62^{+0.08}_{−0.10} 65^{+8}_{−5} 29.4^{+16.0}_{−9.0} 0.7 1.1 1.16^{+0.92}_{−0.57} 104.5/120 XSS J12270–4859 0.4–100 0.037^{+0.025}_{−0.023} – – < 127 33.4^{+18.4}_{−10.6} 1.2 2.3 1.60^{+0.88}_{−0.56} 75.3/76 IGR J14536–5522 0.3–100 0.071^{+0.07}_{−0.03} 12.2^{+8.3}_{−6.0} 0.58^{+0.08}_{−0.09} 60^{+7}_{−5} 16.3^{+5.0}_{−4.0} 2.4 1.5 1.03^{+0.65}_{−0.40} 130.4/140 IGR J15479–4529 0.3–100 0.065^{+0.014}_{−0.008} 14.6^{+8.3}_{−3.7} 0.52^{+0.08}_{−0.07} 101^{+12}_{−10} 28.4^{+3.2}_{−2.8} 2.4 6.1 1.82^{+0.36}_{−0.34} 116.4/108 IGR J16167–4957 0.6–100 0.96^{+0.15}_{−0.12} 94.0^{+42.7}_{−37.2} 0.84^{+0.11}_{−0.34} 95^{+15}_{−12} 16.7^{+6.6}_{−4.5} 1.7 2.3 0.75^{+1.74}_{−0.36} 94.0/86 IGR J16500–3307 0.9–50 1.88^{+0.73}_{−0.64} – – 119^{+28}_{−22} 32.0^{+31}_{−11} 1.1 1.9 1.25^{+0.81}_{−0.52} 46.7/30 IGR J17195–4100 0.3–100 0.23^{+0.04}_{−0.06} – – 104^{+12}_{−11} 29.7^{+5.4}_{−4.2} 2.4 3.6 1.35^{+0.31}_{−0.26} 263.3/263 IGR J17303–0601^e 0.3–100 0.20^{+0.04}_{−0.02} 45.2^{+25.1}_{−18.6} 0.52^{+0.14}_{−0.12} 85^{+9}_{−12} 31.6^{+12.7}_{−7.8} 1.9 4.4 1.22^{+0.59}_{−0.49} 320.0/290 FO Aqr 0.4–50 0.78^{+0.19}_{−0.18} 7.2^{+1.2}_{−0.9} 0.82^{+0.04}_{−0.03} 61^{+8}_{−6} [29.7]^f 3.6 2.1 0.75^{+0.22}_{−0.21} 155.7/169 a XRT/IBIS cross-calibration constant;

b For this source the fit also includes a narrow Gaussian line at E = 6.46^{+0.05}_{−0.04} keV with EW = 141^{+43}_{−58} eV (see text for details); c For this source the fit also includes a Gaussian iron line at E = 6.35^{+0.05}_{−0.03} keV with σ = 0.29^{+0.05}_{−0.04} keV and EW = 371^{+59}_{−53} eV (see text for details); d For this source the fit also includes a narrow Gaussian line at 6.4 keV with EW = 195^{+115}_{−108} eV (see text for details); e For this source the fit also includes a further thermal component (MEKAL code) with kT = 0.21^{+0.01}_{−0.02} keV (see text for details); f Fixed at the value obtained by fitting the IBIS spectrum alone.

INTEGRAL/IBIS and Swift/XRT observations of hard cataclysmic variables 11

Table 4. Fit statistics for each source with and without the blackbody component.

Source χ^2/ν F –test No BB with BB V709 Cas 349.2/331 325.8/329 1.12 × 10^{−5} GK Per 615.2/501 510.5/499 6.10 × 10^{−21} IGR J06253+7334 173.4/122 104.5/120 6.37 × 10^{−14} XSS J12270–4859 81.2/78 75.3/76 5.69 × 10^{−2} IGR J14536–5522 434.4/142 130.4/140 2.66 × 10^{−37} IGR J15479–4529 182.1/108 116.1/106 4.36 × 10^{−11} IGR J16167–4957 103.0/88 94.0/86 1.96 × 10^{−2} IGR J16500–3307 64.2/32 46.7/30 8.45 × 10^{−3} IGR J17195–4100 277.0/265 263.3/263 1.27 × 10^{−3} IGR J17303–0601 417.4/292 320.0/290 1.85 × 10^{−17} FO Aqr 190.3/171 155.7/169 4.32 × 10^{−8}

12 R. Landi et al.

Table 5. Table of characteristics of the CVs observed by INTEGRAL.

Source P_{orb} P_{spin} P_{spin}/P_{orb} Mass Dist Refs (min) (s) (M⊙) (pc) IGR J00234+6141 242.0 ± 0.3 563.53 ± 0.62 0.04 – 530 1 V709 Cas 320.4 312.7 0.0167 0.90 ± 0.10 230 ± 20 2, 3 GK Per 2875.2 351.34 0.00204 0.92^{+0.39}_{−0.13} 420 2, 4 BY Cam 201.3 11846.4 0.981 ⩾ 0.8 190 2, 5 IGR J06253+7334 283 1186.7 0.07 0.8 500 2, 6, 7 XSS J12270–4859 – – – – 220 8 V834 Cen 101.4 – – 0.70^{+0.20}_{−0.15} 80 2, 9 IGR J14536–5522 – – – – 190 8 IGR J15094-6649 – – – – 140 8 IGR J15479–4529 562 693 0.021 ⩾ 0.5 540–840 2, 9 IGR J16167–4957 – – – – 170 8 IGR J16500–3307 – – – – ∼210 10 V2400 Oph 205.2 927 0.075 0.69^{+0.06}_{−0.24} 300 2, 4 IGR J17195–4100 – – – – 110 8 IGR J17303–0601 924 128 0.0023 0.89–1.02 – 11 V2487 Oph – – – – – 12 V1223 Sgr 201.9 745.6 0.062 1.046^{+0.049}_{−0.012} 527 2, 13 V1432 Aql 201.94 12150.4 1.003 1.2 ± 0.2 230 2, 14 V2069 Cyg 448.8 – – – 1650 2 IGR J21335+5105 431.6 570.8 0.022 0.6–1.0 1400 2, 15 SS Cyg 396.2 – – – 166 2 FO Aqr 291 1254.5 0.0718 1.19^{+0.11}_{−0.31} 400 3, 16

References: [1] Bonnet-Bidaud et al. (2007); [2] Barlow et al. (2006) and references therein; [3] Suleimanov et al. (2005); [4] Evans & Hellier (2007); [5] Schwarz et al. (2005); [6] Staude et al. (2003); [7] Araujo-Betancor et al. (2003); [8] Masetti et al. (2006); [9] De Martino et al. (2006b); [10] Masetti et al. (2008); [11] De Martino et al. (2008); [12] Hernanz & Sala (2002); [13] Beuermann et al. (2004); [14] Rana et al. (2005); [15] Bonnet-Bidaud et al. (2006); [16] Norton et al. (2004).

INTEGRAL/IBIS and Swift/XRT observations of hard cataclysmic variables 13

Figure 1. Photon index distribution of the whole IBIS CVs sample.

Figure 2. Temperature distribution of the whole IBIS CVs sample.

Figure 3. IBIS average spectrum fitted with a simple power law (upper panel); residuals to this model are in units of σ (lower panel).

Figure 4. IBIS average spectrum fitted with a bremsstrahlung model (upper panel); residuals to this model are in units of σ (lower panel).

14 R. Landi et al.

Figure 5. Best-fit model of the XRT/IBIS phase-averaged spectrum of the eleven systems followed-up by Swift, as described in Table 3 (upper panel); residuals to this model are in units of σ (lower panel).

INTEGRAL/IBIS and Swift/XRT observations of hard cataclysmic variables 15

Figure 5. -Continued

16 R. Landi et al.

Figure 6. Confidence contours (at 68%, 90%, and 99% confidence level) of the iron line energy versus line width for the best-fit model of GK Per.