arXiv:0810.3141v1 [astro-ph] 17 Oct 2008

The QUIJOTE CMB Experiment

J.A. Rubiño-Martín^1, R. Rebolo^1, M. Tucci^1, R. Génova-Santos^1, S.R. Hildebrandt^1, R. Hoyland^1, J.M. Herreros^1, F. Gómez-Reñasco^1, C. López Caraballo^1, E. Martínez-González^2, P. Vielva^2, D. Herranz^2, F.J. Casas^2, E. Artal^3, B. Aja^3, L. de la Fuente^3, J.L. Cano^3, E. Villa^3, A. Mediavilla^3, J.P. Pascual^3, L. Piccirillo^4, B. Maffei^4, G. Pisano^4, R.A. Watson^4, R. Davis^4, R. Davies^4, R. Battye^4, R. Saunders^5, K. Grainge^5, P. Scott^5, M. Hobson^5, A. Lasenby^5, G. Murga^6, C. Gómez^6, A. Gómez^6, J. Ariño^6, R. Sanquirce^6, J. Pan^6, A. Vizcargüenaga^6, and B. Etxeita^6

1 Instituto de Astrofisica de Canarias (IAC), C/Via Lactea, s/n, E-38200, La Laguna, Tenerife, Spain. Corresponding author: jalberto@iac.es 2 Instituto de Fisica de Cantabria (IFCA), CSIC-Univ. de Cantabria, Avda. los Castros, s/n, E-39005 Santander, Spain.

3 Departamento de Ingenieria de COMunicaciones (DICOM), Laboratorios de I+D de Telecomunicaciones, Plaza de la Ciencia s/n, E-39005 Santander, Spain.

4 Jodrell Bank Centre for Astrophysics, School of Physics and Astronomy, University of Manchester, Oxford Road, Manchester M13 9PL, UK 5 Astrophysics Group, Cavendish Laboratory, University of Cambridge, Madingley Road, Cambridge CB3 0HE 6 IDOM, Avda. Lehendakari Aguirre, 3, E-48014 Bilbao, Spain.

Summary. We present the current status of the QUIJOTE (Q-U-I JOint TEnerife) CMB Experiment, a new instrument which will start operations early 2009 at Teide Observatory, with the aim of characterizing the polarization of the CMB and other processes of galactic and extragalactic emission in the frequency range 10-30 GHz and at large angular scales. QUIJOTE will be a valuable complement at low frequencies for the PLANCK mission, and will have the required sensitivity to detect a primordial gravitational-wave component if the tensor-to-scalar ratio is larger than r = 0.05.

1 Introduction

The study of the Cosmic Microwave Background (CMB) anisotropies is one of the main pillars of the Big Bang model. With the latest results from WMAP satellite [5], and the information provided by ground-based experiments such as VSA [3], ACBAR [13] or CBI [12], it has been possible to determine cosmological parameters with accuracies better than 5% (see e.g. [4]).

However, the CMB contains far more information encoded in its polarization signal. Since the first detection of polarization by the DASI experiment[7], other experiments have started to measure the angular power spectrum of the polarization. Although those measurements are still having a relatively poor signal-to-noise, they show excellent agreement with the predictions of the standard ΛCDM model.

The standard theory predicts that the CMB is linearly polarized, the physical mechanism responsible for its polarization being Thomson scattering during the recombination or reionization epochs. Generally speaking, the polarization tensor can be decomposed in terms of a E-field (gradient) and a B-field (rotational) components [17, 6]. Due to parity conservation, this implies that we have three angular power spectra to describe the polarization field: the TE (cross-correlation of temperature and E mode), the EE and BB power spectra. All the other combinations (TB and EB) should be zero.

If the fluctuations in CMB intensity are seeded by scalar perturbations (i.e fluctuations in the density alone), one would only expect primordial E modes in the CMB polarization. However, vector and tensor perturbations, like those due to gravitational waves in the primordial Universe (e.g. [11]), are mechanisms that could generate primordial B-modes in the polarization on large angular scales. Therefore if we can measure these modes we may have a unique way to carry out a detailed study of the inflationary epoch. In particular, the energy scale V at which inflation occurred can be expressed in terms of r, the ratio of tensor to scalar contributions to the power spectrum, as [9]

r = 0.001 ( V 10^{16} GeV

)_4 (1) The current upper limit of r ≲ 0.3 from WMAP data [8] translates into V ≲ 4 × 10^{16} GeV.

Because of the importance of detecting primordial gravitational waves [2, 10], there is a huge interest to develop ground-based experiments to measure (or constrain) the amplitude of B-modes power spectrum of the CMB polarization. Here we present one of these efforts.

The QUIJOTE (Q-U-I JOint TEnerife) CMB Experiment is a scientific collaboration between the Instituto de Astrofísica de Canarias, the Instituto de Física de Cantabria, the IDOM company, and the universities of Cantabria, Manchester and Cambridge, with the aim of characterizing the polarization of the CMB, and other galactic and extragalactic physical processes in the frequency range 10-30 GHz and at angular scales larger than 1 degree. Updated information of the project can be found at the following web page:

http://www.iac.es/project/cmb/quijote.

Fig. 1. QUIJOTE scientific goal for the angular power spectrum of the CMB E and B mode signals. It is shown the case for 3 years operation time, and a sky coverage of ∼ 5, 000 square degrees. The red line corresponds to the primordial B-mode contribution in the case of r = 0.1. Yellow line indicates the associated QUIJOTE noise power spectrum. Dots with error bars correspond to averaged measurements over a certain multipole band.

2 Science goals

The QUIJOTE-CMB experiment has two primary scientific goals:

• to detect the imprint of gravitational B-modes if they have an amplitude r ≥ 0.05; • to provide essential information of the polarization of the synchrotron and the anomalous microwave emissions from our Galaxy at low frequencies (10-20 GHz).

In order to achieve these scientific objectives, we need to cover a total sky area of the order of 3,000 - 10,000 square degrees, and to reach sensitivities of ∼ 3 − 4 μK per one degree beam after one year of operation with the low frequency instrument (11-19 GHz), and ≲ 1 μK per beam with the second instrument at 30 GHz. Although the final observing strategy is still under discussion, a possible solution is presented in Fig. 1, where we show the scientific goal for the angular power spectrum of the E and B modes after 3 years of operation, assuming a sky coverage of 5,000 square degrees. In this particular case, the final noise figure for the 30 GHz map is ∼ 0.5 μK/beam.

According to those nominal sensitivities, QUIJOTE will provide one of the most sensitive 11-19 GHz measurements of the polarization of the synchrotron and anomalous emissions on degree angular scales. This information is extremely important given that B-modes are known to be sub-dominant in amplitude as compared to the Galactic emission (see e.g. [14]). This is illustrated in the left panel of Fig. 2, where we present the amplitude of the expected synchrotron and radio-source contribution at 30 GHz, computed according to the models described in [14].

The QUIJOTE low frequency maps will complement the measurements of the Planck satellite^7, helping in the characterization of the Galactic emission. In particular, QUIJOTE will provide a key contribution to assess the level of a possible contribution of polarized microwave anomalous emission [16, 1].

Using the low frequency maps, we plan to correct the high frequency QUI- JOTE channel (30 GHz) to search for primordial B-modes. To illustrate this, Fig. 2 shows the residual synchrotron contribution after a pixel-by-pixel correction of the high frequency map assuming a pure power-law behavior for the synchrotron emission law. The issue of radio-sources is discussed below, in the context of the source subtraction facility.

Fig. 2. Left: Expected foreground contamination in the 30 GHz QUIJOTE frequency band. It is shown the contribution of polarized synchrotron emission and radio-sources for the case of subtracting sources down to 1 Jy in total intensity (upper dashed line for radio-sources) and 300 mJy (lower dashed-line). Right: Correction of the synchrotron emission at 30 GHz. The magenta line shows the predicted synchrotron level from a simulation of the expected signal. Assuming a pure powerlaw dependence for the synchrotron emission in the QUIJOTE frequency range, the blue line shows the synchrotron residual after correction using the low frequency channels (11 to 19 GHz).

3 Experimental details

3.1 Project baseline

QUIJOTE-CMB will observe at five frequencies, namely 11, 13, 17, 19 and 30 GHz, with an angular resolution of ∼ 1 degree. It will operate from the

7 PLANCK: http://www.rssd.esa.int/index.php?project=Planck

Observatorio del Teide (2400 m) in Tenerife (Spain), which has been shown to be an excellent place for CMB observations (same site as Tenerife, COS- MOSOMAS, VSA and JBO-IAC Interferometer experiments).

The project has two phases. Phase I, which is completely funded, consists in the construction of a first telescope and two instruments which can be exchanged in the focal plane. The first instrument will be a multichannel instrument providing the frequency coverage between 11 and 19 GHz, plus a single pixel at 30 GHz, and it is expected to start observations at the beginning of 2009. The second instrument will consist of 19 polarimeters working at 30 GHz, and it is expected to start operations at the end of 2009. Table 1 summarizes the basic parameters describing these two instruments^8. The temperature sensitivity per beam is computed as ΔQ = ΔU = √ 2 T_{sys} √ Δν t N_{chan} , (2)

being N_{chan} the number of channels, Δν the bandwidth and T_{sys} the system temperature (i.e. including the sky). Phase I also includes a source subtractor facility to monitor and correct the contribution of polarized radio-sources in the final maps. The overall time baseline for the project is to achieve the main science goal (r = 0.1) by end of 2011, and r = 0.05 by 2015.

Finally, Phase II (which is still not funded) considers the construction of a second telescope identical to the first one, and a third instrument with 30 polarimeters at 40 GHz.

Table 1. QUIJOTE-CMB Experiment. Instruments characteristics.

Instrument I Instr. II Frequency [GHz] 11.0 13.0 17.0 19.0 30.0 30.0 Bandwidth [GHz] 2.0 2.0 2.0 2.0 8.0 8.0 Number of channels 8 8 8 8 2 38 Beam FWHM [deg] 0.92 0.92 0.60 0.60 0.37 0.37 Tsys [K] 20.0 20.0 20.0 20.0 30.0 20.0 Sensitivity [Jy s^{1/2}] 0.24 0.34 0.24 0.30 0.43 0.07 Sens per beam [mK s^{1/2}] 0.22 0.22 0.22 0.22 0.34 0.05

3.2 Telescope and enclosure

The QUIJOTE-CMB telescope uses a crossed-Dragonian design, where the primary has a 3 m projected aperture, and the secondary 2.6 m. The system is under-illuminated to minimize sidelobes and ground spillover. In addition, a cylindrical absorbing screen surrounding the optics (see Fig. 3) minimizes

8 Note that our definition for Stokes parameters is such that Q = Tx − Ty.

the spillover signal. Both mirrors have been designed to operate up to 90 GHz i.e. rms ≤ 20 μm and maximum deviation of d = 100 μm.

The whole system is mounted on a platform that can rotate around the vertical axis at a frequency of 0.25 Hz. The supporting structure has been designed using an alto-azimuthal concept which enables the telescope to point to any position in the sky with elevation above the horizon higher than 30^∘.

Fig. 3. Left: Design of one of the QUIJOTE telescopes inside the enclosure. Right: Assembling the first QUIJOTE telescope (October 7th, 2008).

3.3 First instrument

This is a multi-channel instrument with five separate polarimeters (providing 5 independent sky pixels): two which operate at 10-14 GHz, two which operate at 16-20 GHz, and a central polarimeter at 30 GHz. The science driver for this first instrument is the characterization of the galactic emission. The optical arrangement includes 5 conical corrugated feedhorns (designed by the University of Manchester) staring into a dual reflector crossed-dragonian system, which provides optimal cross-polarization properties (designed to be ≤ −35 dB) and symmetric beams. Each horn feeds a novel cryogenic on-axis rotating polar modulator which can rotate at speeds of up to 40 Hz (see Fig. 4). This rotational rate is fast enough to switch out 1/f noise in the lower frequency LNAs (since polar modulation occurs at four times the rotational rate, i.e. 160 Hz). The 30 GHz Front-End module (FEM) has additional phase switching to provide stability. The orthogonal linear polar signals are separated through a wide-band cryogenic Ortho-Mode-Transducer (OMT) before being amplified through two similar LNAs (a Faraday type module in the case of

30 GHz). These two orthogonal signals are fed into a room-temperature Back- End module (BEM) where they are further amplified and spectrally filtered before being detected by square-law detectors. All the polarimeters except the 30 GHz receiver have simultaneous ”Q” and ”U” detection i.e. the 2 orthogonal linear polar signals are also correlated through a 180^∘ hybrid and passed through two additional detectors. The band passes of these lower frequency polarimeters have also been split into an upper and lower band which gives a total of 8 channels per polarimeter (see Table 1).

The FEM for the low frequency channels is being built by IAC. The receivers for these channels use MMIC 6-20 GHz LNAs (designed by S. Weinreb and built in Caltech). The gain for these amplifiers is approximately 30 dB, and the noise temperature is less than 9 K across the band. The 30 GHz FEM is being built at the University of Manchester, and the design uses an existing Faraday module (same as the one used for OCRA-F^9). The BEM for the 30 GHz instrument is being built by DICOM, with collaboration of IFCA at the simulation level. The cryogenics and the mechanical systems are provided by CMS^{10} (Jeff Julian), IDOM and IAC.

Fig. 4. Left: Detailed design of the first instrument. It is shown four horns (the 30 GHz is the central one, two horns at 17-19 GHz, and one of the 11-13 GHz horns in the back). After each antenna, we see the waveguide, the polar modulator and the OMT. Right: A prototype of the final polar modulator.

9 OCRA-F: http://www.jodrellbank.manchester.ac.uk/research/ocra/ocraf.html. 10 CMS: http://www.cryo-mechanicalsystems.com/

3.4 Second instrument

This instrument will be devoted to primordial B-modes science. It will consist in 19 polarimeters operating at 30 GHz. The conceptual design is a re-scaled version of the first instrument.

3.5 Source subtractor facility

An upgraded version of the VSA source subtractor (VSA-SS) facility [15], which is being carried out by the Cavendish Laboratory and the University of Manchester, will be used to monitor the contribution of radio-sources in the QUIJOTE maps. The VSA-SS is a two element interferometer, operating at 30 GHz, with 3.7 m dishes and a separation of 9 m (see Fig. 5). We have estimated that at 30 GHz it is enough to correct the emission of all sources with fluxes in total intensity higher than 300 mJy in order to make the residual source contribution equal or smaller than the expected B-mode signal for the case of r = 0.1 (see Fig. 5). In that case, the total number of sources to be monitored in the whole QUIJOTE surveyed area is around 500. The expected flux sensitivity per source is ∼ 2 − 3 mJy.

Fig. 5. Left: One antenna of the VSA source subtractor. This facility will be reused to measure polarization of radio sources to correct the QUIJOTE 30 GHz maps. Right: Radio-source contribution at 30 GHz (top solid oscillating line), and the residuals after removing/masking sources with fluxes (in total intensity) higher than 300 mJy or 100 mJy (black lines). Solid red lines are obtained removing sources with polarized intensity higher than 50 or 10 mJy.

4 Conclusions

QUIJOTE-CMB will provide unique information about the polarization emission (synchrotron and anomalous) from our Galaxy at low frequencies. This information will be valuable for future B-mode experiments. In particular, QUIJOTE will complement at low frequencies the information obtained by Planck. Using the information from the low frequencies, QUIJOTE will be able to detect the B-mode signal due to primordial gravity waves in the 30 GHz map if r ≥ 0.05.

References

1. Battistelli, E. S., Rebolo, R., Rubiño-Martín, J. A., Hildebrandt, S. R., Watson, R. A., Gutiérrez, C., & Hoyland, R. J.: ApJ, 645, L141 (2006) 2. Bock, J., et al.: Task Force on Cosmic Microwave Background Research, arXiv:astro-ph/0604101 (2006) 3. Dickinson, C., et al: MNRAS, 353, 732 (2004) 4. Dunkley, J., et al: ApJ submitted (2008), arXiv:0803.0586. 5. Hinshaw, G., et al: ApJ submitted (2008), arXiv:0803.0732. 6. Kamionkowski, M., Kosowsky, A., & Stebbins, A.: Phys. Rev. D, 55, 7368 (1997) 7. Kovac, J. M., Leitch, E. M., Pryke, C., Carlstrom, J. E., Halverson, N. W., & Holzapfel, W. L.: Nature, 420, 772 (2002) 8. Komatsu, E., et al.: ApJ submitted (2008), arXiv:0803.0547. 9. B. Partridge: CMB observations and Cosmological Constraints. In: The Cosmic Microwave Background: from quantum fluctuations to the present Universe, Edited by J.A. Rubiño-Martin, R. Rebolo and E. Mediavilla (CUP 2009) pp 1–52 10. Peacock, J. A., Schneider, P., Efstathiou, G., Ellis, J. R., Leibundgut, B., Lilly, S. J., & Mellier, Y.: ESA-ESO Working Group on ”Fundamental Cosmology”, Edited by J.A. Peacock et al. ESA (2006) 11. Polnarev, A. G.: Soviet Astronomy, 29, 607 (1985) 12. Readhead, A. C. S., et al: ApJ, 609, 498 (2004) 13. Reichardt, C. L., et al: ApJ submitted (2008), arXiv:0801.1491. 14. Tucci, M., Martínez-González, E., Vielva, P., & Delabrouille, J.: MNRAS, 360, 935 (2005) 15. Watson, R. A., et al.: MNRAS 341, 1057 (2003) 16. Watson, R. A., Rebolo, R., Rubiño-Martín, J. A., Hildebrandt, S., Gutiérrez, C. M., Fernández-Cerezo, S., Hoyland, R. J., & Battistelli, E. S.: ApJ, 624, L89 (2005) 17. Zaldarriaga, M., & Seljak, U.: Phys. Rev. D, 55, 1830 (1997)