arXiv:0902.1652v1 [astro-ph.CO] 10 Feb 2009

DRAFT VERSION AUGUST 5, 2019 Preprint typeset using L^ATEX style emulateapj v. 08/22/09

DEEP Chandra MONITORING OBSERVATIONS OF NGC 4278: CATALOG OF SOURCE PROPERTIES

N. J. BRASSINGTON, G. FABBIANO, D.-W. KIM, A. ZEZAS Harvard-Smithsonian Center for Astrophysics, 60 Garden Street, Cambridge, MA 02138

S. ZEPF, A. KUNDU Department of Physics and Astronomy, Michigan State University, East Lansing, MI 48824-2320

L. ANGELINI Laboratory for X-Ray Astrophysics, NASA Goddard Space Flight Center, Greenbelt, MD 20771

R. L. DAVIES Sub-Department of Astrophysics, University of Oxford, Oxford OX1 3RH, UK

J. GALLAGHER Department of Astronomy, University of Wisconsin, Madison, WI 53706-1582

V. KALOGERA, T. FRAGOS Department of Physics and Astronomy, Northwestern University, Evanston, IL 60208

A. R. KING Theoretical Astrophysics Group, University of Leicester, Leicester LE1 7RH, UK

S. PELLEGRINI Dipartimento di Astronomia, Universita di Bologna, Via Ranzani 1, 40127 Bologna, Italy

G. TRINCHIERI INAF-Osservatorio Astronomico di Brera, Via Brera 28, 20121 Milan, Italy Draft version August 5, 2019

ABSTRACT We present the properties of the discrete X-ray sources detected in our monitoring program of the globular cluster (GC) rich elliptical galaxy, NGC 4278, observed with Chandra ACIS-S in six separate pointings, resulting in a co-added exposure of 458-ks. From this deep observation, 236 sources have been detected within the region overlapped by all observations, 180 of which lie within the D_{25} ellipse of the galaxy. These 236 sources range in L_X from 3.5×10^{36} erg s^{−1} (with 3σ upper limit ≤1×10^{37} erg s^{−1}) to ∼ 2 × 10^{40}erg s^{−1}, including the central nuclear source which has been classified as a LINER. From optical data, 39 X-ray sources have been determined to be coincident with a globular cluster, these sources tend to have high X-ray luminosity, with ten of these sources exhibiting L_X> 1 × 10^{38}erg s^{−1}. From X-ray source photometry, it has been determined that the majority of the 236 point sources that have well constrained colors, have values that are consistent with typical LMXB spectra, with 29 of these sources expected to be background objects from the logN − logS relation. There are 103 sources in this population that exhibit long-term variability, indicating that they are accreting compact objects. 3 of these sources have been identified as transient candidates, with a further 3 possible transients. Spectral variations have also been identified in the majority of the source population, where a diverse range of variability has been identified, indicating that there are many different source classes located within this galaxy.

Subject headings: galaxies: individual (NGC 4278) — X-rays: galaxies — X-ray: binaries

1. INTRODUCTION

NGC 4278 is the second of two nearby, isolated, normal elliptical galaxies for which we were awarded deep monitoring observations with Chandra ACIS-S (Weisskopf et al. 2000). The purpose of these observations was to study the low-mass

Electronic address: nbrassington@head.cfa.harvard.edu

X-ray binary (LMXB) population down to limiting luminosities of a few (0.3−8.0 keV) 10^{36} erg s^{−1}, well in the range of those LMXBs in the Galaxy and M31. LMXBs are the only direct fossil evidence of the formation and evolution of binary stars in the old stellar populations of early-type galaxies. First discovered in the Milky Way (see Giacconi 1974), these binaries are composed of a compact accretor, neutron star or black

2 Brassington et al.

hole, and a late-type stellar donor. The origin and evolution of Galactic LMXBs has been the subject of much discussion, centered on two main evolution paths (see Grindlay 1984; review by Verbunt & Van den Heuvel 1995): the evolution of primordial binary systems in the stellar field, or formation and evolution in Globular Cluster.

With the advent of Chandra, many LMXB populations have been discovered in early-type galaxies (see review Fabbiano 2006), and the same evolutionary themes (field or GC formation and evolution) have again surfaced, supported and stimulated by a considerably larger and growing body of data. With our unique observations of NGC 3379 (Brassington et al. 2008) and NGC 4278 (this paper), we can now take a fresh look at these issues. Moreover, our observations have a time sampling that permits variability studies and the identification of X-ray transients. Such data will extend the limited sample of existing multi-epoch observations (albeit with higher limiting luminosities; e.g. Irwin 2006; Sivakoff et al. 2008), where a variety of different variability behaviours of LMXBs have already been observed. Both multi-epoch observations and low luminosity thresholds are important aspects of the observational characteristics of Galactic LMXBs and are needed for constraining the evolution of these populations (e.g., Piro & Bildsten 2002, Bildsten & Deloye 2004).

The first galaxy that was observed in this program was NGC 3379, in the nearby poor group Leo (D=10.6 Mpc; Tonry et al. 2001). This system was chosen for this study because it is a relatively isolated unperturbed ‘typical’ elliptical galaxy, with an old stellar population (age of 9.3 Gyr, Terlevich & Forbes 2002) and a poor globular cluster system (S_{GC} = 1.3 ± 0.7, Harris 1991; where S_{GC} = No.GC×10^{(0.4(MV +15))}). From the 324-ks Chandra observation, reported in detail in Brassington et al. (2008), 132 X-ray point sources were detected, 98 of which were found to lie within the D_{25} ellipse of the galaxy. Through HST observations of the galaxy the globular cluster system was identified in the central region and ten GC-LMXBs detected. These GC-LMXB associations were found to have high luminosities, with three sources exhibiting L_X≥ 1 × 10^{38}erg s^{−1}. Also from studying this population it was determined that 48% of the detected LMXBs were found to show some type of long-term variability, with 5 of these sources being classified as transients and a further 3 of these as possible transients.

The characteristics of NGC 4278 are similar to those of NGC 3379 in all but the GC population, where NGC 4278 has a rich globular cluster system (S_{GC} = 6.1 ± 1.5, Harris 1991), making it an ideal galaxy to explore the evolution of LMXB from primordial field binaries in a rich environment. Like NGC 3379, NGC 4278 is a nearby (D=16.1 Mpc; Tonry et al. 2001) relatively isolated, unperturbed ‘typical’ elliptical galaxy with an old stellar population (age of 10.7 Gyr, Terlevich & Forbes 2002).

Observationally, NGC 4278 is an ideal target for LMXB population studies, because of its proximity, resulting in a resolution of ∼ 36 pc with Chandra, and its lack of a prominent hot gaseous halo. These characteristics optimize the detection of fainter LMXBs, and minimize source confusion; because of its angular diameter (D_{25} = 4.0 arcmin, RC3), NGC 4278 is entirely contained in the ACIS-S3 CCD chip, and is not affected by the degradation of the Chandra PSF at large radii.

Here we publish the catalog of LMXBs with their properties resulting from the entire observational campaign of NGC 4278 (five observations between March 2006 and February

2007, for a total of ∼ 430 ks), which has been recently completed, and includes the first 37 ks observation taken in 2005, from the Chandra archive. In addition to this catalog paper, further highlights from the X-ray binary population of NGC 4278 will be presented in forthcoming papers. In the first (Kim et al. 2009, in prep) we compare the X-ray luminosity function of GC and field LMXBs detected in both NGC 4278 and NGC 3379. This will be followed by a paper presenting the properties of the transient population of both galaxies (Brassington et al. 2009, in prep). Further papers will be presented on: the properties of the nuclear source and the diffuse emission of NGC 4278, as well as the nonuniform distribution of the LMXBs within the galaxy and the intensity and spectral variability of the luminous X-ray binary population.

This paper is organized as follows: §2. details the observational program and describes the data analysis methods and results, including pipeline processing of the data, source detection, astrometry and matching of sources from the different observations, X-ray photometry and overall population results, variability analysis and optical counterpart matching (GC and background objects); §3. is the source catalog, including the results from the individual observations and the co-added data; §4 presents the discussion of the properties of the sources catalog; §5 summarizes the conclusions of this work.

2. OBSERVATIONS AND DATA ANALYSIS

The six separate Chandra observations of NGC 4278 have been carried out over a two year baseline, with the first of these, a 37 ks pointing, being performed in February 2005. This observation has been followed by five deeper pointings, all carried out between March 2006 and February 2007, resulting in a total exposure time of 471-ks.

The initial data processing to correct for the motion of the spacecraft and apply instrument calibration was carried out with the Standard Data Processing (SDP) at the Chandra Xray Center (CXC). The data products were then analysed using the CXC CIAO software suite (v3.4)^1 and HEASOFT (v5.3.1). The data were reprocessed, screened for bad pixels, and time filtered to remove periods of high background. Following the methods of Kim et al. (2004a), time filtering was done by making a background light curve and then excluding those time intervals beyond a 3σ fluctuation above the mean background count rate, where the mean rate was determined iteratively after excluding the high background intervals. This resulted in a total corrected exposure time of 458-ks, the log of these exposures is presented in Table 1.

From the six individual data sets, a combined observation was produced, using the script merge_all^2, where the reprocessed level 2 event files from each observation were reprojected to a given RA and Dec, and then combined, and a combined exposure map was also created. Each of the individual observations used in the merge_all script were first corrected for relative astrometry before being reprocessed and reprojected. These corrections were done by using the CIAO tool reproject_aspect^3 to update the aspect solution files by comparing the source list from an individual observation to the source list from a single reference observation (in this case the longest cleaned exposure obs-7078). These corrected aspect solution files were then used in all subsequent analysis.

1 http://asc.harvard.edu/ciao 2 http://asc.harvard.edu/ciao/ahelp/merge_all.html 3 http://asc.harvard.edu/ciao/threads/reproject_aspect/

Catalog of the X-ray sources in NGC 4278 3

From the co-added dataset of these six observations, a 0.3−8.0 keV (from here on referred to as ‘full band’) Chandra image was created and adaptively smoothed using the CIAO task csmooth. This uses a smoothing kernel to preserve an approximately constant signal to noise ratio across the image, which was constrained to be between 2.4σ and 4σ. In Figure 1, both the optical image, with the full band X-ray contours overlaid (top), and the ‘true color’ image of the galaxy system (bottom) are shown. The ‘true color’ image was created by combining three separate smoothed, and exposure corrected, images in three energy bands; 0.3−0.9 keV, 0.9−2.5 keV and 2.5−8.0 keV, using the same smoothing scale for each image. These energy bands correspond to red, green and blue respectively.

2.1. Source Detection and Count Extraction Regions

Discrete X-ray sources were searched for over each observation (the six single observations and the co-added observation) using the CIAO tool wavdetect, where the full band, with a significance threshold parameter of 1×10^{−6}, corresponding to roughly one spurious source over one CCD, was searched over. This CIAO tool searches for localized enhancements of the X-ray emission, and does not set any apriori thresholds on the S/N of each source (in contrast to sliding cell algorithms: Freeman et al. 2002). In Kim et al. (2004a) simulations were carried out to investigate the number of false detections compared to the expected ∼1 false source per image provided by the threshold significance of 1×10^{−6}. These simulations and results are detailed in §4 of the paper, where they find that the performance of wavdetect is as expected, resulting in ∼1 spurious source per image. These simulations cover the values of background (∼0.28 counts/pixel) of our co-added observation. Further to this, these simulations were compared to Chandra observations with relatively long exposures (∼100 ks), where 0.3 spurious sources per exposure were detected, fully consistent with the simulation results. A similar approach was also used by Kenter et al. (2005).

Following the results of these simulations it is clear that, when setting a detection threshold of 1×10^{−6} in wavdetect, only one of the formally identified sources is expected to be a false detection per image and so this prescription has been followed here. We reiterate that using this method does not set any apriori thresholds on the S/N of each source, it is therefore possible to include sources that have a high detection significance but at the same time a low flux significance, or S/N, therefore resulting in sources with poorly constrained flux.

When running wavdetect a range of 1, 2, 4, 8, 16 and 32 pixel wavelet scales were selected (where pixel width is 0.49^{′′}), with all other parameters set at the default values. Exposure maps were created for the S3 chip from each observation, at 1.5 keV. The wavdetect tool was used in preference to other source detection software, as this detection package can be used within the low counts regime, as it does not require a minimum number of background counts per pixel for the accurate computation of source detection thresholds. Further to this, wavdetect also performs better in confused regions, which is the case in the nuclear region of elliptical galaxies (Freeman et al. 2002).

Once the X-ray sources had been detected, and their position had been determined by wavdetect, counts were extracted from a circular region, centered on the wavdetect position, with background counts determined locally, in an annulus surrounding the source, following the prescription of Kim et al.

(2004a). The extraction radius for each source was chosen to be the 95% encircled energy radius at 1.5 keV (which varies as a function of the off-axis angle^4), with a minimum of 3^{′′} near the aim point. Similarly, background counts for each source were estimated from a concentric annulus, with inner and outer radii of two and five times the source radius respectively.

When nearby sources were found within the background region, they were excluded before measuring the background counts. Net count rates were then calculated with the effective exposure (including vignetting) for both the source and background regions. Errors on counts were derived following Gehrels (1986). For cases where sources have fewer than 4 counts, the Gehrels approximation begins to differ to Poissonian errors. However, these error values are still accurate to 1%, and, if anything, provide a more conservative estimate as Gehrels approximation does not account for the smaller error value at the lower limit. When the source extraction regions of nearby regions were found to overlap, to avoid an overestimate of their source count rates, counts were calculated from a pie-sector, excluding the nearby source region, and then rescaled, based on the area ratio of the chosen pie to the full circular region. Once the correction factor was determined, it was applied to correct the counts in all energy bands. For a small number of sources that overlapped with nearby sources in a more complex way (e.g. overlapped with more than 2 sources), instead of correcting the aperture photometry, the source cell determined by wavdetect was used to extract the source counts in each energy band.

From these source counts, fluxes and luminosities were calculated in the 0.3−8.0 keV band, with an energy conversion factor (ECF) corresponding to an assumed power law spectral shape, with Γ = 1.7 and Galactic N_H^5 (see Figure 11 for a justification of this assumption). The ECF was calculated with the arf (auxiliary response file) and the rmf (redistribution matrix file) generated for each source in each observation. For each source, the spatial and temporal quantum efficiency variations^6 were accounted for by calculating the ECF in each observation and then taking an exposure-weighted mean ECF. The ECF over the 0.3−8.0 keV band varied by only ∼2% between all six of the observations taken between 2005 and 2007^7. This procedure was applied to each single observation and to the total co-added exposure.

In the instances where wavdetect did not formally identify a source in a single observation, source counts have been extracted from a circle with a 95% encircled energy radius, centered on the position from the co-added observation (or in cases where the source was not formally detected in the co-added observation, the source position from the single observation was used). The definition of background regions and the treatment of overlapping sources are outlined above. From these extracted source counts, a Bayesian approach, developed by Park et al. (2006), has been used to provide 68% source intensity upper confidence bounds on the full band counts. These values have then been used to calculate upper limits on the flux and luminosity of these sources.

2.2. Source Correlation

4 see http://cxc.harvard.edu/cal/Hrma/psf/index.html 5 N_H=1.76×10^{20}cm^{−2} (from COLDEN:

http://cxc.harvard.edu/toolkit/colden.jsp).

6 See http://cxc.harvard.edu/cal/Acis/Cal_prods/qeDeg/ for the low energy QE degradation.

7 http://asc.harvard.edu/ciao/why/acisqedeg.html

4 Brassington et al.

From the co-added observation only, 271 sources were detected by wavdetect. From this list, sources external to the overlapping area covered by the S3 chip in all six individual observations were excluded, reducing this total number to 220 point sources. Using this source list from the co-added observation, sources detected in the individual observations were matched with this list, where source correlations were searched for up to a separation of 2^{′′}. In the cases where multiple matches were detected for a source, the closer correlation was selected. From these matches, a histogram of source separations, shown in the left panel of Figure 2, was produced. In this figure it is clear that the peak separation between sources lies ∼0.15^{′′}, with the number of correlated sources dropping at ∼1.0^{′′}, and this is therefore the value we set for maximum separation when cross-correlating sources.

Once a cut of 1.0^{′′} had been applied to the cross-matched source list, the remaining unmatched sources, detected in the separate pointings only, were investigated individually, resulting in further potential matches being established. These potential matches correspond to sources with fewer counts, and hence a greater positional uncertainty, leading to larger values of separation. These potential source correlations were then further investigated by calculating the ratio of the source separation and the combined position uncertainty. Where the position uncertainty at the 95% confidence level has been defined by Kim et al. (2007a), as:

logPU =

0.1145 × OAA− 0.4958 × logC+ 0.1932, 0.0000 < logC ≤ 2.1393, 0.0968 × OAA− 0.2064 × logC− 0.4260, 2.1393 < logC ≤ 3.3000 (1)

where the position uncertainty, PU, is in arcseconds, and the off axis angle, OAA, is in arcminutes. Source counts, C, are as extracted by wavdetect. Using this ratio of source separation and position uncertainty allows low L_X source correlations to be identified. Often these sources, particularly at greater off axis angles, cannot be matched by source separation cuts alone, due to the increasing PSF spread out and asymmetry at larger OAA^8. Therefore, by using this source separation - PU ratio, the greater position uncertainties in these weak sources can be accounted for, resulting in smaller ratios, and thereby identifying correlations that would otherwise be missed with source separation cuts alone.

In the right panel of Figure 2, a histogram of the ratio of separation and the combined position uncertainty is shown, where sources with a ratio of greater than 1 were investigated individually. In all but one instance it was found that these higher ratio sources lie in the central region of the galaxy, where both source confusion is likely and diffuse gas may be present. This emission results in higher background fluctuations, which can lead to the PU of these sources to be underestimated, therefore resulting in a falsely high ratio value. The source that was detected outside the central region is too faint (net counts <∼ 100 counts) to allow its radial profiles to be compared with a corresponding model PSF profile, generated for the source position using the CIAO tool mkpsf, and has been flagged as a possible double sources.

After confirming that these additional sources with separation ≥1^{′′}, were correlated with sources detected in the coadded observation, the remaining list of sources detected in individual observation was reduced to sixteen. All of these

8 See §5 in Kim et al. (2004a) for a full discussion

sixteen sources were determined to be well separated from the sources detected in the co-added observation, and were therefore included in the final list of detected sources, increasing the total number to 236. These 236 sources are presented in Figure 3, where the unsmoothed full band image from the coadded dataset, with regions overlaid in white, is shown.

2.3. Hardness Ratios and X-ray colors

Within NGC 4278, the range of net counts for the pointlike sources in the co-added observation is ∼ 7 − 48772 (with signal-to-noise ratio (S/N) values ranging from 1.1 to 218.8), corresponding to 0.3−8.0 keV luminosities of 3.5 ×10^{36} erg s^{−1}(3σ upper limit ≤1×10^{37} erg s^{−1}) − 2 × 10^{40}erg s^{−1}, when using the energy conversion factor described in §2.1. Most of these sources are too faint for detailed spectral analysis, therefore their hardness ratio and X-ray colors were calculated in order to characterize their spectral properties. The X-ray hardness ratio is defined as HR = (Hc−Sc)/(Hc+Sc), where Sc and Hc are the net counts in the 0.5−2.0 keV and 2.0−8.0 keV band respectively. Following the prescription of Kim et al. (2004b), the X-ray colors are defined as C21 = log(S_1/S_2) and C32 = log(S_2/H), where S_1, S_2 and H are the net counts respectively in the energy bands of 0.3−0.9 keV, 0.9−2.5 keV and 2.5−8.0 keV (energy bands and definitions are summarized in Table 2). These counts were corrected for the spatial and temporal QE variation, referring them all to the aim point of the first, recent observing epoch (Feb. 2006, Table 1), and for the effect of the Galactic absorption, using N_H=1.76×10^{20}cm^{−2} (from COLDEN: http://cxc.harvard.edu/toolkit/colden.jsp).

By definition, as the X-ray spectra become harder, the HR increases and the X-ray colors decrease. For faint sources with a small number of counts, the formal calculation of the HR and colors often results in unreliable errors, because of negative net counts in one band and an asymmetric Poisson distribution. Therefore a Bayesian approach has been applied to derive the uncertainties associated with the HR and colors. This model was developed by Park et al. (2006) and calculates values using a method based on the Bayesian estimation of the ‘real’ source intensity, which takes into account the Poisson nature of the probability distribution of the source and background counts, as well as the effective area at the position of the source (van Dyk et al. 2001), resulting in HR and color values that are more accurate than the classical method, especially in the small-number-of-counts regime (less than 10 counts), where the Poisson distributions become distinctly asymmetric.

2.4. Source Variability

Due to the monitoring approach that has been used when observing NGC 4278, both long-term and short-term variations have been able to be searched for in the galaxy’s LMXB population. Long-term variability was defined by the chisquared test, where a straight line model was fitted to the luminosities derived for each individual observation, with errors based on the Gehrels approximation (Gehrels 1986). For the cases where sources only had upper limit values of L_X, the associated error was defined to be the standard deviation of the upper limit from the mode value attained from the Bayesian estimates method, resulting in a conservatively large error, due to the nature of the Poissonian statistics. From these best fit models, sources were determined to be variable if χ^2_ν >1.2, and those with fits with χ^2_ν <1.2 were defined as non-variable

Catalog of the X-ray sources in NGC 4278 5

sources. For sources that were only detected in the co-added observation, long-term variability was not searched for. This long-term behaviour will be further investigated in a forthcoming paper, where full Poissonian error treatment will be applied to sources with very low observed counts.

In addition to the chi-squared test variability criterion, transient candidates (TC), sources that either appear or disappear, or are only detected for a limited amount of ‘contiguous’ time during the observations, were searched for. Typically, sources are defined to be TCs if the ratio between the ‘on-state’, the peak L_X luminosity, and the ‘off-state’, the lower L_X luminosity or non-detection upper limit, is greater than a certain value (usually between 5−10; e.g. Williams et al. 2008). However, such a criterion can overestimate the number of transient candidates, when the ‘on-state’ X-ray luminosity is poorly constrained. To address this, the Bayesian model developed by Park et al. (2006) was used to derive the uncertainties associated with the ratio between ‘on-state’ and ‘off-state’. In this model, source and background counts from both the peak L_X luminosity and the non-detection observations were used to estimate the ratio, where the differences in both the exposure and ECF values were also accounted for. From this Bayesian approach a value of peak L_X/non-detection upper limit was calculated, along with a lower bound value of this ratio. This lower bound value was then used to determine the transient nature of the source, where a ratio of greater than 10 indicated a TC and sources with a ratio between 5 and 10 were labeled as possible transient candidates (PTC). This transient behavior was only searched for in sources that were only detected for a limited amount of ‘contiguous’ time during the observations and were determined to be variable using the chi-squared test.

Further to these four long-term variability classifications, the variation of the source luminosity between each observation was also investigated, by comparing the significance (in σ) of the change in luminosity between exposures, where the significance has been estimated by:

signi f =

|L_{X1} − L_{X2}| √ (σ^2_1 + σ^2)

, (2)

where σ_n is the error value of the luminosity from that individual observation, based on the Gehrels approximation, or, where upper limits have been used, the standard deviation of the estimated luminosity.

Short-term variations in each source were investigated when net counts > 20 in a single observation. In these instances, the variability was identified by using the Kolmogorov-Smirnov test (K-S test), where sources with variability values >90% confidence were labeled as possible variable sources and sources with values >99% confidence were defined as variable sources. This short-term variability was also quantified by using the Bayesian blocks method (BB) (Scargle 1998; Scargle et al. 2009, in prep). This method searches for abrupt changes in the source intensity during an observation, and therefore is very efficient for detecting bursts or state changes. Because it is based on the Poisson likelihood it can be used on the unbinned lightcurves of sources with very few counts. The implementation of the method used in this analysis is the same as in the ChaMP pipeline (see §3.3.2 in Kim et al. 2004a). This assumes a prior of γ = 4.0 which roughly translates to a significance level of ∼ 99% for each detected block (however see Scargle et al.

(2009, in prep)^9, for a caveat on this interpretation of the value of the prior).

2.5. Radial Profile

From the complete source list from the co-added observation a radial distribution of LMXBs has been created, using annuli centered on the nucleus of the galaxy (source 117). This profile has been compared to a multi-Gaussian expansion model of the I-band optical data (Cappellari et al. 2006), which is assumed to follow the stellar mass of the galaxy (Gilfanov 2004). This X-ray source density profile is presented in Figure 4, where the optical profile has been normalized to the X-ray data by way of a χ^2 fit. The central 1^{′′} profile of the galaxy has not been plotted due to the excess of optical light, arising from the LINER that lies at the center of NGC 4278. Also indicated in this figure is the D_{25} ellipse and the number of background sources, which has been estimated from the hard-band ChaMP +CDF logN − logS relation (Kim et al. 2007b), where ∼29 sources are expected to be objects not associated with NGC 4278. From this figure it can be seen that the X-ray profile follows the optical surface density profile at larger radii, with the flattening in the central region (r≤15^{′′}) a consequence of source confusion. This indicates that the number and spatial distribution of LMXBs follows that of their parent population, the old stellar population.

2.6. Optical Counterparts

The globular cluster system of NGC 4278, observed with WFPC2, on-board HST, is reported in Kundu & Whitmore (2001), where images in both the V and I bands have been analyzed. In addition to this GC system identified in the HST data, background objects have also been classified (Kundu, A. 2007, private communication). These have been identified as objects that were well resolved in the HST images and were clearly more extended than any known globular cluster. Further to this, these background objects often had other features, such as visible disks, indicative of a galaxy rather than a globular cluster.

Right ascension and declination corrections have been applied to the astrometry of the HST data, relative to the coadded Chandra observation. This was done by comparing the positions of all GC-LMXB correlations with separations ≤1^{′′} and with net counts≥50, resulting in 37 matches. From these matches relative offsets of ΔRA=0.48^{′′} and ΔDec=0.22^{′′} were identified and removed from the HST data.

After correcting the astrometry of these optical data, correlations up to an offset of 3^{′′} with the X-ray sources, were searched for. When multiple matches were found, the closer matching object was selected. In the left panel of Figure 5, a histogram of these matches is shown, where it can be seen that the number of source correlations decreases at ∼1^{′′} before increasing at greater separations. Because of this clear distinction, the source radius was set to 1^{′′} and sources between 1^{′′} and 3^{′′} were defined as ‘excluded matches’. This cut off radius value was then tested by comparing these correlations with the ratio of the separation divided by the combined position uncertainty from the co-added X-ray point sources (the definition of this is given in equation 1) and the uncertainty in the astrometry in the optical data, which has been conservatively set at 0.2^{′′}.

These ratios are shown in the right panel in Figure 5, where a histogram of all optical-X-ray correlations is presented, with

9 see also http://space.mit.edu/CXC/analysis/SITAR/functions.html

6 Brassington et al.

a shaded histogram of the background correlations only, overlaid. From this figure, it is shown that the majority of the confirmed GC correlated sources have a separation-position uncertainty ratio of less than 1.4. All of the sources with a ratio of greater than 1.4 were visually inspected and only two sources are found to have small separations <0.5^{′′}. The remaining sources all have separations > 0.6^{′′} and have been identified as excluded matches. From this further analysis the separation value cut off was redefined to be 0.6^{′′}. This results in 45 X-ray-optical correlations, 6 of which have been classified as background objects, which is consistent with the number of sources that are expected to be background objects from the logN − logS relation (5). This leaves 39 GC-X-ray source that are classified as correlations. The optical properties of these GC-LMXB sources, and the ‘excluded matches’ are shown in Tables 11 and 12 respectively (Full descriptions of these tables are given in §3).

In order to estimate the chance coincidence probability of the sources within the HST FOV, the same method as in Zezas et al. (2002) was followed, where the positions of the globular clusters were randomized by adding a random shift between 0.6^{′′}and 30^{′′}, and for each new fake dataset the crosscorrelation was performed using the same search radius as for the observed list of globular clusters. The limits of the shifts were chosen so that the new positions did not fall within the search radius and that they follow the general spatial distribution of the globular clusters. 500 such simulations were performed, resulting in 2.05±1.43 associations expected by chance. If the cross-correlation radius is increased to 1^{′′}, the chance associations rises to 4.96±2.10. Increasing this radius to 3^{′′} results in 35.85±6.00 associations expected by chance, which is slightly higher than the 31 ‘excluded matches’ that have been found within this radius.

In Figure 6 the confirmed GC and X-ray sources, as well associated correlations, are indicated. In the top image circular regions indicating the X-ray sources with no GC counterpart are overlaid on a full band X-ray image, where the confirmed GCs are indicated by white ’X’ marks. Also in this image the D_{25} ellipse and HST field of view are also shown. In the bottom image a full band X-ray image covering the HST FOV is presented, where the correlated X-ray sources are indicated by box regions and the white ’X’ marks indicate the confirmed GCs. In both images X-ray luminosities are indicated by color, where sources with L_X≥1×10^{38}erg s^{−1} are shown in yellow, sources with 1×10^{38} ≥L_X≥1×10^{37}erg s^{−1} are shown in red and sources with L_X≤1×10^{37}erg s^{−1} are indicated in cyan.

3. SOURCE CATALOG AND VARIABILITY ATLAS

Table 3 presents the properties of the master list of the 236 X-ray sources detected within NGC 4278, from the coadded observation of 458-ks. This table has been divided into two sections, where the first part presents all sources with S/N>3 in at least one observation, and the second part lists all sources with S./N<3. In this table column (1) gives the source number used through out this series of papers, column (2) gives the IAU name (following the convention “CXOU Jhhmmss.s+/−ddmmss”), columns (3) and (4) give the R.A. and Dec. of the source aperture, columns (5) and (6) give the radius and the position uncertainty (PU) of the source (both in arcseconds), column (7) gives the S/N, column (8) gives the log value of the co-added luminosity in the 0.3−8.0 keV energy band (for sources with S/N<3, 3σ upper limit values are also presented in brackets). For sources detected in a single observation only, 1σ upper limit from the co-added observation are shown, with 3σ upper limit values from the detected observation presented in brackets. Column (9) provides information about the long-term variability of the source, indicating if the source is non-variable (N), variable (V), a transient candidate (TC) or a possible transient (PTC). In all other cases the source was only detected in the combined observation, providing insufficient information to investigate longterm variability. In columns (10) and (11) the short-term variability of the source is indicated from both Bayesian block analysis (BB) and the Kolmogorov-Smirnov test (K-S), where ‘V’ indicates that the source is variable in at least one observation and ‘N’ indicates that is has been found to be nonvariable in all six observations. In the K-S column, sources have also been labeled as possible variable sources (P) (see §2.4 for further information). In all other cases there were insufficient counts to investigate the short-term variability. In column (12) the optical associations with the X-ray source are indicated, where ‘GC’ indicates that the associated optical sources has been confirmed as a globular cluster, and ‘BG’ indicates that the sources has been classified as a background object. ‘corr’ denotes matches that have been defined as correlations, and ‘exmt’ denotes the ‘excluded matches’, between 0.8^{′′} and 3^{′′} in separation. Sources with a ‘none’ label were inside the field of view of the HST observation, but have no optical counterpart. All other sources were external to the HST FOV. Column (13) gives the distance from the galactic center (in arcseconds), where values in bold type face indicate sources that lie within the D_{25} ellipse. Column (14) provides source flag information, indicating sources that have been detected in a single observation only (X), overlapping sources (O1 for single overlaps and O2 for more complicated cases) and possible double sources (double?).

In this table, the 236 sources presented are the complete list detected by wavdetect, for which we estimate that ∼1 source is a spurious detection (see §2.1). Since this catalog of X-ray sources is intended to be as complete a study as possible, all detected sources are included in the complete list, although for sources with S/N<3 source parameters such as flux, hardness ratio and color values are not as well constrained as sources with higher flux significance. We have therefore separated the table into two sections, where the first part presents sources with S/N >3 in at least one observation and well constrained properties, and the second part lists the sources with low S/N values.

Table 4 presents the detailed source parameters from the co-added observation; column (1) gives the source number, columns (2)−(8) give the net counts, in each of the 7 energy bands (see Table 2 for definitions of these bands), column (9) indicates the hardness ratio, columns (10) and (11) show the color-color values and column (12) gives the log value of the luminosity in the 0.3−8.0 keV energy band. Where sources were not detected in the co-added observation, upper limits for net broad band counts and L_X are given.

Tables 5−10 present the source parameters, measured for each observation, where columns (1)−(11) provide the same information presented in Table 4, but further provided in this table is source variability information, where columns (12)−(14) present results of Bayesian block analysis (BB), the Kolmogorov-Smirnov test (K-S) and the significance of the change in L_X between the previous observation and the current observation respectively. Column (15) indicates the log value of the luminosity in the 0.3−8.0 keV energy band.

Table 11 presents the optical properties of the counterparts

Catalog of the X-ray sources in NGC 4278 7

found from the optical data of NGC 4278, where 39 GCs and 6 background objects have been found to be coincident with X-ray sources. Table 12 summarizes the results for the ‘excluded matches’ sources. In both tables column (1) gives the X-ray source number, column (2) the V band magnitude, column (3) the I band magnitude, column (4) V−I colors, column (5) the separation between the X-ray source and the GC and column (6) the ratio between separation and the combined position error. The horizontal line in both tables separates the confirmed GCs (top section of table) from the background objects (bottom section of table).

Figure 7 presents the intensity and spectral variability of each of the 236 X-ray sources, over all six pointings, where the temporal properties of each point source are shown in four separate panels. In the top panel the long-term light curve of each source is presented, with errorbars indicating the 1σ uncertainty in the intensity of the source, with upper limit values provided for sources that were not detected in a single observation. The second panel shows the hardness ratio variation of each source, and panels three and four, show the temporal properties of C21 and C32 respectively. In all four panels, the co-added values are also indicated, by a horizontal dashed green line. In instances where the source was not detected in the co-added observation, a blue line indicates the upper limit of the source luminosity.

Figure 8 presents the L_X-HR plots for sources with measured hardness ratios in at least two observations. Each point shows the X-ray luminosity and hardness ratio value of a source during each pointing, as well as the values derived from the co-added observation. Each point is labeled and color coded, where magenta, green, blue, red, cyan and dark green indicate observations 1−6 respectively, and black represents the co-added observation value. Similarly, Figure 9 presents the color-color values for sources with measured color-color values in at least two observations, where again individual observations are labeled and color coded (following the same color scheme as in Figure 8), with the co-added observation indicated in black.

4. DISCUSSION

4.1. X-ray Source Population

In the previous sections the data analysis methods, used to determine the properties of the X-ray binary population of NGC 4278, have been presented. From the six individual Chandra pointings, taken between February 2005 and February 2007, a co-added observation, totaling an exposure time of 458-ks, has been produced. From this deep observation of the galaxy, 236 X-ray point sources have been detected in the region overlapped by all of the individual pointings, with 180 of these sources residing within the D_{25} ellipse of the system. These 236 sources are presented in Figure 3 where a raw, full band image from the co-added observation, with the overlap region and D_{25} ellipse overlaid, is presented in the main image, with source regions also indicated. The two following images present the central region of the galaxy, where the dense population of sources can be more clearly seen. Of these 236 sources, based on the hard-band ChaMP +CDF logN −logS relation (Kim et al. 2007b), ∼29 sources detected in the co-added observation are expected to be objects not associated with NGC 4278. Within the D_{25} ellipse of the galaxy it is expected that ∼12 of these sources are background objects. In Figure 4 the number of expected background objects is indicated in the X-ray source number density profile of the galaxy and appears consistent with the flattening of the profile at larger radii.

The total number of LMXBs residing in NGC 4278 is much greater than that of NGC 3379 (notwithstanding the 90% completeness limit of L_X∼ 5 × 10^{36} erg s^{−1} compared to L_X∼ 1 × 10^{37} erg s^{−1} in NGC 4278), where only 98 sources were detected within the D_{25} ellipse of the galaxy, compared to 180 in the D_{25} ellipse of NGC 4278. This increase in the total LMXB population in NGC 4278 follows the known correlation of increasing X-ray luminosity arising from LMXBs (normalized by L_B) with increasing globular cluster specific frequency (S_{GC}) (e.g Kim et al. 2006, Irwin 2005). Such a relationship confirms the importance of LMXB formation in GCs, and through the deep observations that have presented here and in Brassington et al. (2008) this correlation will be further investigated in a forthcoming paper, where the hypothesis that all LMXBs were formed in GCs will be tested.

The X-ray luminosity of the sources detected within NGC 4278 ranges from 3.5× 10^{36} erg s^{−1} (with 3σ upper limit ≤1×10^{37} erg s^{−1}) up to ∼ 2 × 10^{40}erg s^{−1}, where the brightest source, 117, lies at the nucleus of the galaxy and has been classed as a LINER with Hα emission (Ho et al. 1997). The full X-ray data analysis of this source from these six observations will be reported in a forthcoming paper. Apart from this central source, no LMXBs exceeding 1×10^{39}erg s^{−1} have been detected in this galaxy, unlike NGC 3379, where a ULX source with a co-added X-ray luminosity of ∼ 2 × 10^{39}erg s^{−1} was discovered. This lack of ULXs in NGC 4278 is unsurprising as it is rare to find such a high luminosity object (external to the nuclear region) in E and S0 galaxies (Irwin, Bregman & Athey 2004).

The L_X distribution of all of the detected X-ray sources within NGC 4278 is shown in Figure 10, where the GC associations are also indicated. In this figure the main histogram presents the calculated L_X values from all sources (with 1σ upper limits from the co-added observation provided for sources only detected in a single observation), except for the central bright source 117. The bottom left histogram presents these same sources, but for those with S/N<3, 3σ upper limits are shown, these upper limit values are then presented separately in the bottom right histogram. From the main figure it can be seen that the majority of sources detected from this observation lie in the luminosity range of 1 × 10^{37}erg s^{−1}−6 × 10^{37}erg s^{−1}, with a mode luminosity of ∼ 1.5×10^{37}erg s^{−1} and with source incompleteness beginning to affect the source distribution L_X≤ 1×10^{37}erg s^{−1}. From the histogram including 3σ upper limit values, this mode value remains the same, as does source incompleteness.

In the forthcoming paper Kim et al. (2009, in prep), the X-ray luminosity function (XLF) of NGC 4278 will be investigated, and a correction to allow for source incompleteness will be applied. Some preliminary results, investigating the XLF of NGC 4278, alongside NGC 3379, have been reported in Kim et al. (2006), where sources, down to a 90% completeness limit of L_X∼3×10^{37}erg s^{−1}, from the first two observations, have been detected. From the even greater sensitivity afforded to us by combining the six separate pointings, we can investigate the XLF close to the X-ray luminosity range of normal Galactic LMXBs. Previously, this has only been possible for the nearby radio galaxy Centaurus A (NGC 5128), where the XLF has been measured down to ∼ 2 × 10^{36}erg s^{−1} (Kraft et al. 2001; Voss & Gilfanov 2006). With our greater

8 Brassington et al.

sensitivity we can compare our results to these studies, allowing us to investigate the shape of the low luminosity LMXB XLF, although it should be noted that both NGC 3379 and NGC 4278 are much more ‘normal’ galaxy than Centaurus A.

In addition to the X-ray point sources that have been presented in this catalog, the optical sources within NGC 4278 have also been identified. These were detected in a WFPC2 HST observation, where 266 confirmed globular clusters have been identified. From these 266 sources, 39 GC-LMXB, with separations < 0.6^{′′}, have been detected. From Figure 10 it can bee seen that these 39 GC-LMXB sources appear to predominantly lie at the high X-ray luminosity end of this distribution. The luminosity function of these GC-LMXB sources from both galaxies and its implications for the understanding of LMXB evolution will also be presented in Kim et al. (2009, in prep), where the X-ray luminosity functions of both GC and field LMXBs will be compared.

4.2. X-ray Colors

In Figure 11 the LMXB population color-color diagram, based on the photometry of the co-added observation, is presented. In the top panel color-color values are plotted, with the sources divided into luminosity bins, with symbols of each bin indicated by the labeling in the panel. In the bottom panel, the errorbars for each of these points are plotted. Also in this figure source variability is indicated, where variable sources are plotted in blue, non-variable sources are shown in green and sources with undetermined variability are indicated in cyan. Additionally, in both of the panels a grid has been overlaid to indicate the predicted locations of the sources at redshift z=0 for different spectra, described by a power law with various photon indices (0≤ Γ_{ph} ≤ 4, from top to bottom.) and absorption column densities (10^{20} ≤N_H ≤ 10^{22} cm^{−2}, from right to left). In Figure 12 the L_X-HR, L_X-C21 and L_X-C32 population plots are presented, where variability is again indicated by color, with variable sources shown in blue, non-variable sources are plotted in green and sources with undetermined variability are shown in cyan.

From the color-color diagram, presented in Figure 11, it can be seen that most of the well defined colors lie within the area of a typical LMXB spectrum of Γ = 1.5 − 2.0, with no intrinsic absorption (e.g. Irwin, Athey & Bregman 2003; Fabbiano 2006). However, there also appears to be a population of sources that have much harder spectra, again with either no intrinsic absorption, or sources with a possible soft excess, albeit with colors that are not as well defined. The L_X- HR distribution of this subpopulation was explored to identify sources with higher hardness ratios than one would expect from LMXBs but it was found that the sources that were identified in the color-color diagram did not exhibit harder HR values (see the top panel of Figure 12). Because of this, while it is possible that these sources could be absorbed background AGN, the poorly constrained colors of this subpopulation alone do not provide adequate information to confirm this interpretation. The overall color-color and L_X-HR distributions of the LMXB population within NGC 4278 is very similar to that of NGC 3379, where again, most of the sources with well constrained colors were determined to lie within the area of a typical LMXB spectrum. Also in NGC 3379, like NGC 4278, a subpopulation of sources with harder spectra with either no intrinsic absorption, or a soft excess, was identified. However, unlike the subpopulation of NGC 4278, these sources were determined to show not only color-color values indicating their harder spectra, but also exhibited higher HR values and for this reason were flagged as possible absorbed background AGN.

4.3. Source Variability

A characteristic of compact accretion sources such as LMXBs is variability, and, as a result of the monitoring nature of the observing campaign, we have been able to search for this variability, in both the long-term regime, and also over short-term baselines, where changes over hours and days have been identified. One of the specific aims of our monitoring campaign has been to identify transient candidate sources as it has been suggested that field LMXBs are expected to be transients (Piro & Bildsten 2002; King 2002) and low luminosity ultracompact binaries in GCs are also expected to be transient in nature (Bildsten & Deloye 2004). In the forthcoming paper Brassington et al. (2009, in prep) we investigate the subpopulation of transient candidates that has been discovered in both NGC 4278 and NGC 3379.

Our data represent the most complete variability study for an extragalactic LMXB population (see Fabbiano 2006; Xu et al. 2005), investigating both long and short term behaviour. In the case of the long-term variability, sources have been separated into four different classifications; non-variable and variable sources, and also transient candidates (TC) or possible transients candidates (PTC). These two latter definitions have been applied to sources that either appear or disappear, or are only detected for a limited amount of ‘contiguous’ time during the observations, with a lower bound ratio of greater than 10 between the ‘on-state’ and the ‘off-state’, for TCs, or a lower bound ratio between 5 and 10 for the PTCs (see §2.4 for a full discussion of this definition).

The 13 sources that were investigated for transient behavior are presented in Table 13, where both the ratio and lower bound ratio, calculated from Bayesian modeling, are presented, along with each source’s variability classification. From this table is can be seen that many of these sources appear to be PTCs and TCs from their ratio alone, but when allowing for the uncertainties from their source and background counts, they can only be classified as variable sources. Including the uncertainties when determining TCs is particularly important when dealing with sources with low S/N values, as is the case for a number of sources in this catalog.

Out of the 236 sources, 97, 41% of the sources within NGC 4278, have been defined as variable sources. A further 3 sources are TCs, and 3 are PTCs, with 97 sources found to be non-varying in intensity over the six observations. The remaining 36 sources have insufficient data to investigate their long-term variability. These levels of long-term variability observed in NGC 4278 are very similar to those of NGC 3379, where 42% of the sources were determined to be variable, with a further 5 sources identified as TCs and 3 as PTCs. This similar number of TCs/PTCs in both galaxies is maybe somewhat surprising, given the larger number of LMXBs detected within NGC 4278. However, from theory it has been suggested that transient sources will predominantly be field LMXBs (Piro & Bildsten 2002) and in fact, in NGC 4278 five of the six TC/PTC sources have been determined to be field sources and in NGC 3379 three of the four TC/PTCs that we have optical coverage for are also field sources (the remaining 4 TC/PTCs are external to the HST FOV). Both NGC 3379 and NGC 4278 were selected for this study as they have very similar L_B values (1.35×10^{10}L_⊙, 1.63×10^{10}L_⊙), and by comparing the number of field TCs/PTCs in each galaxy to their

Catalog of the X-ray sources in NGC 4278 9

field population we find similar values of 11% and 9% respectively, compared to 8% and 3% when including the whole Xray source population within the D_{25} ellipse. These values are consistent with the suggestion that transient sources will be predominantly found in the field, and this result will be further explored in the forthcoming paper Brassington et al. (2009, in prep).

The long and short-term variability of the X-ray sources with NGC 4278, are summarized in Table 14, where these two variability parameters have been cross-correlated, to indicate the number of sources exhibiting both long and shortterm variations, although, the majority of these sources do not have sufficient counts in each observation to determine their short-term variability. The numbers within this table indicate the number of sources from the whole observation and the numbers in brackets represent the sources within the D_{25} ellipse. From this table it can be seen that, for the sources with a defined short-term variability measure, both long-term variable and non-variable sources have a variety of short-term behavior. For the transient candidates no observations had sufficient counts with which to investigate their short-term variability. Also, as an additional point, all of the TCs, and PTCs found within NGC 4278 reside well within the D_{25} ellipse of the galaxy, indicating that they are likely LMXBs associated with NGC 4278.

In addition to the L_X variability, spectral variations have also been investigated. These are presented in Figures 8 and 9, where L_X-HR and color-color plots for each source are shown. From these figures it is clear that the majority of sources within NGC 4278 exhibit some sort of variability, with a variety of different spectral variations shown within this population. This spectral variability is similar to behaviour discussed in McClintock & Remillard (2006), with a significant number of sources emitting softer spectra as L_X increases (e.g sources 76 and 147). It has been suggested that this increasing softness represents a thermal state, where the flux is dominated by the heat radiation from the inner accretion disk. Conversely, sources exhibiting spectral hardening with increasing L_X are also present within the galaxy (e.g sources 14 and 119). This harder state has been explained as a steep power law state, where a highly energized corona is present (e.g. Feng & Kaaret 2006). In addition to these spectral behaviors, sources that show little to no spectral variation with increasing luminosity (e.g. sources 40 and 169), and sources that show no discernible pattern at all (e.g. sources 118 and 158) have also been detected. A more detailed discussion of the spectral variability of all of these X-ray sources presented in this catalog will be the subject of a forthcoming paper.

5. CONCLUSIONS

We have presented a source catalog and variability atlas resulting from our monitoring deep observations of the nearby elliptical NGC 4278 with Chandra ACIS-S. Our results can be summarized as follows:

• 236 X-ray point sources have been detected within NGC 4278, ranging in luminosity from 3.5× 10^{36} erg s^{−1} (with 3σ upper limit ≤1×10^{37} erg s^{−1}) to ∼ 2 × 10^{40}erg s^{−1}, with 180 of these sources residing within the D_{25} ellipse of the galaxy.

• The nuclear source in this galaxy has been classified as a LINER with Hα emission (Ho et al. 1997) and has a luminosity of ∼ 2 × 10^{40}erg s^{−1} from the co-added observation.

• 39 globular clusters have been identified to be coincident with X-ray sources, all of which lie within the D_{25} ellipse of the galaxy. These GC-LMXB associations tend to have high X-ray luminosities, with ten of these sources exhibiting L_X> 1 × 10^{38}erg s^{−1}.

• From source photometry, it has been determined that the majority of source with well constrained colors have values that are consistent with a typical LMXB spectrum of Γ = 1.5 − 2.0, with no intrinsic absorption.

• 103 sources, 44% of the X-ray source population, have been found to exhibit some type of long-term variability, which clearly identifies them as accreting compact objects. 3 of these variable sources have been identified as transient candidates, with a further 3 identified as possible transients.

• Spectral variability analysis has revealed that the sources within NGC 4278 exhibit a range of variability patterns, where both high/soft−low/hard and low/soft−high/hard spectral transitions have been observed, as well as sources that vary in luminosity, but exhibit no spectral variation, indicating that there are many different source classes within this galaxy.

Following this catalog paper we will be presenting highlights from the X-ray binary population of this galaxy in forthcoming papers. The first will compare the X-ray luminosity function of GC and field LMXBs detected in both NGC 4278 and NGC 3379 (Kim et al. 2009, in prep). This will be followed by a paper presenting the properties of the transient population of both galaxies (Brassington et al. 2009, in prep). In addition to these we will also present papers on: the properties of the nuclear source and the diffuse emission of NGC 4278, as well as the nonuniform distribution of the sources within the galaxy and the intensity and spectral variability of the luminous X-ray binary population.

We thank the CXC DS and SDS teams for their efforts in reducing the data and developing the software used for the reduction (SDP) and analysis (CIAO). We would also like to thank the referee, Jimmy Irwin, for his helpful comments which have improved this paper. This work was supported by Chandra G0 grant G06-7079A (PI:Fabbiano) and subcontract G06-7079B (PI:Kalogera). We acknowledge partial support from NASA contract NAS8-39073(CXC). A. Zezas acknowledges support from NASA LTSA grant NAG5-13056. S. Pellegrini acknowledges partial financial support from the Italian Space Agency ASI (Agenzia Spaziale Italiana) through grant ASI-INAF I/023/05/0.

REFERENCES

Bildsten, L. & Deloye, C. J. 2004, ApJ, 607, L119 Brassington, N., J., et al. 2008, ApJS, 179, 142 Cappellari, M., et al. 2006, MNRAS, 366, 1126 Fabbiano, G. 2006, ARAA, 44, 323

Feng, H. & Kaaret, P. 2006 ApJL, 650, L75 Freeman, P. E., Kashyap, V., Rosner, R. & Lamb D. Q., 2002, ApJS, 138, 185 Gehrels, N. 1986, ApJ, 303, 336

10 Brassington et al.

Giacconi, R. 1974, in X-ray Astronomy, eds. R. Giacconi & H. Gursky, p.155, Dordrecht: Reidel Gilfanov, M. 2004, MNRAS, 349, 146 Grindlay, J. E. 1984, Adv. Space Res., 3, 19 Harris, W. E. 1991, ARAA, 29, 543 Ho, L. C., Filippenko, A. V., Sargent, W. L. W. & Peng, C. Y. 1997, ApJS, 112, 391 Irwin, J. A., Athey, A. E. & Bregman, J. N. 2003, ApJ, 587, 356 Irwin, J. A., Bregman, J. N. & Athey, A. E. 2004, ApJ, 601, L143 Irwin, J. 2005, ApJ, 631, 511 Irwin, J. 2006, MNRAS, 371, 1903 Kenter, A., et al. 2005, ApJS, 161, 9 Kim, D.-W., Cameron, R. A., Drake, J. J., et al. 2004a, ApJS, 150, 19 Kim, D.-W., Wilkes, B., Green, P., et al. 2004b, ApJ, 600, 59 Kim, D.-W., et al. 2006, ApJ, 652, 1090 Kim, M., et al. 2007a, ApJS, 169, 401 Kim, M., et al. 2007b, ApJ, 659, 29 King, A. R. 2002, MNRAS, 335, L13 Kraft, R. P., et al. 2001, ApJ, 560, 675 Kundu, A., Whitmore, B. C. 2001, ApJ, 121, 2950 McClintock, J. E., & Remillard, R. A. 2006, in Compact Stellar X-Ray Sources, ed. W. H. G. Lewin & M. van der Klis (Cambridge: Cambridge Univ. Press), in press

Park, T., Kashyap, V., Siemiginowska, A., van Dyk, D., Zezas, A., Heinke, C., Wargelin, B. 2006, ApJ, 652, 610 Piro, A. L. & Bildsten, L. 2002, ApJ, 571, L103 Scargle, J.D. 1998, ApJ, 504, 405 Sivakoff, G. R., Jordán, A., Juett, A. M., Sarazin, C. L., & Irwin, J. A., 2008, astro-ph/0806.0627 Terlevich, A. I. & Forbes, D. A. 2002, MNRAS, 330, 547 Tonry J., et al. 2001, ApJ, 546, 681 van Dyk, D., et al. 2001, ApJ, 548, 224 Verbunt, F. & van den Heuvel, E. P. J. 1995, in X-ray Binaries, eds. Lewin, W. H. G., van Paradijs, J., van den Heuvel, E. P. J., Cambridge, UK: CUP, p.457 Voss, R. & Gilfanov, M. 2006, A&A, 447, 71 Weisskopf, M. C., Tananbaum, H. D., Van Speybroeck, L. P. & O’Dell, S. L.

2000, Proc. SPIE, 4012, 2 Williams, B. F., et al. 2008, ApJ, 680, 1120 Xu, Y., Xu, H., Zhang, Z., Kundu, A., Wang, Y. & Wu, X.-P., 2005, 631, 809 Zezas, A, Fabbiano, G., Rots, A. H., Murray, S. S. 2002, ApJ, 577, 710

Catalog of the X-ray sources in NGC 4278 11

TABLE 1 OBSERVATION LOG

Obs. Num. OBSID Date Exposure (sec) Cleaned Exposure (sec)

1 4741 2005-02-03 37462.0 37264.5 2 7077 2006-03-16 110303.8 107736.7 3 7078 2006-07-25 51433.2 48076.2 4 7079 2006-10-24 105071.7 102504.6 5 7081 2007-02-20 110724.0 107564.5 6 7080 2007-04-20 55824.8 54837.5 Total - - 470819.5 457984.0

NOTE. — The pointing OBSID 7181 was taken before OBSID 7080, so to maintain the time sequence of the exposures these observation numbers have been labeled as above in this paper.

TABLE 2 DEFINITION OF ENERGY BANDS AND X-RAY COLORS

Band Definition

Broad (B) 0.3−8 keV Soft (S) 0.3−2.5 keV Hard (H) 2.5−8 keV Soft 1 (S_1) 0.3−0.9 keV Soft 2 (S_2) 0.9−2.5 keV Conventional Broad (Bc) 0.5−8 keV Conventional Soft (Sc) 0.5−2 keV Conventional Hard (Hc) 2−8 keV Hardness Ratio HR (Hc−Sc)/(Hc+Sc) X-ray Color C21 −log(S_2 ) + log(S_1 ) = log(S_1 /S_2) X-ray Color C32 −log(H) + log(S_2 ) = log(S_2 /H)

TABLE 3 MASTER SOURCE LIST

Masterid CXOU Name RA Dec Radius PU S/N Log L_X(0.3−8.0 keV) Variability Opt Corr DG Flag (J2000) (J2000) (^{′′}) (^{′′}) (erg s^{−1}) LT BB K-S (^{′′}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

1 J122023.6+291614 12:20:23.640 +29:16:13.92 4.13 0.39 9.2 37.8 V - - - 223.1 - 2 J122023.0+291453 12:20:23.021 +29:14:52.76 4.57 0.34 15.8 38.2 V - P - 242.6 O1 4 J122022.6+291458 12:20:22.570 +29:14:58.08 4.36 0.36 12.6 38.1 V - P - 234.8 O1 5 J122022.6+291536 12:20:22.558 +29:15:35.89 4.09 0.27 24.9 38.5 V N V - 219.1 - 8 J122019.4+291448 12:20:19.435 +29:14:47.98 3.87 0.45 8.8 37.8 N - - - 205.7 - 9 J122019.3+291412 12:20:19.262 +29:14:12.11 4.17 0.87 4.0 37.3 V - - - 227.3 - 11 J122018.0+291655 12:20:17.988 +29:16:54.97 3.00 0.45 6.1 37.5 N - - - 146.1 - 13 J122017.8+291422 12:20:17.753 +29:14:22.22 3.84 0.24 31.6 38.7 V N N - 206.2 - 14 J122017.3+291450 12:20:17.263 +29:14:49.82 3.50 0.29 14.0 38.0 N V N - 182.4 - 15 J122017.2+291612 12:20:17.208 +29:16:12.43 3.00 0.41 6.8 37.5 N - - - 141.2 - 16 J122017.1+291705 12:20:17.110 +29:17:05.00 3.00 0.67 3.4 37.1 V - - - 135.3 - 17 J122016.7+291410 12:20:16.673 +29:14:10.15 3.81 0.34 10.2 37.8 V - P - 205.9 - 19 J122015.8+291758 12:20:15.823 +29:17:58.43 3.00 0.45 5.4 37.4 V - - - 135.8 - 21 J122015.5+291553 12:20:15.521 +29:15:52.59 3.00 0.57 3.7 37.2 N - - - 127.8 - 23 J122014.7+291901 12:20:14.695 +29:19:01.26 3.00 0.51 4.6 37.3 V - - - 166.2 - 24 J122014.5+291854 12:20:14.503 +29:18:54.26 3.00 0.71 4.0 37.2 N - - - 159.2 - 26 J122013.7+291611 12:20:13.661 +29:16:10.64 3.00 0.36 6.8 37.5 V - - - 98.0 - 27 J122013.5+291653 12:20:13.469 +29:16:53.27 3.00 0.61 4.6 37.0 V - - - 87.0 O1 28 J122013.4+291656 12:20:13.433 +29:16:56.03 3.00 0.66 4.5 37.1 - - - - 86.6 O1 29 J122013.3+291848 12:20:13.286 +29:18:47.62 3.00 0.32 8.3 37.7 N - P - 144.2 - 30 J122013.1+291910 12:20:13.066 +29:19:10.28 3.00 0.64 3.3 37.1 V - - - 161.7 - 31 J122012.7+291622 12:20:12.730 +29:16:21.94 3.00 0.18 19.7 38.3 N V N - 82.5 - 32 J122012.5+291742 12:20:12.480 +29:17:42.08 3.00 0.51 2.2 36.9 V - - - 90.1 - 35 J122012.4+291906 12:20:12.384 +29:19:06.18 3.00 0.25 11.0 37.9 N - - - 153.7 - 36 J122011.9+291651 12:20:11.930 +29:16:50.76 3.00 0.44 3.5 37.1 V - - - 66.8 - 38 J122011.7+291622 12:20:11.712 +29:16:22.02 3.00 0.36 6.7 37.4 N - - - 70.1 O2 39 J122011.5+291624 12:20:11.458 +29:16:23.51 3.00 0.24 10.4 37.8 V - P - 66.5 O2 40 J122011.3+291625 12:20:11.316 +29:16:24.53 3.00 0.25 9.9 37.7 V - P - 64.4 O2 41 J122010.9+291628 12:20:10.879 +29:16:28.02 3.00 0.15 24.1 38.5 N N N - 57.8 - 42 J122010.8+291911 12:20:10.814 +29:19:10.75 3.00 0.19 19.1 38.3 N - P - 149.4 - 43 J122010.8+291546 12:20:10.807 +29:15:46.49 3.00 0.23 9.8 37.8 V - - - 82.8 - 44 J122010.4+291421 12:20:10.438 +29:14:21.18 3.00 0.68 3.4 37.1 - - - - 156.9 - 45 J122010.2+291758 12:20:10.236 +29:17:58.47 3.00 0.42 3.8 37.2 N - - none 81.1 - 46 J122010.1+291625 12:20:10.118 +29:16:25.47 3.00 0.40 3.9 37.2 N - - - 50.0 - 48 J122010.1+291703 12:20:10.056 +29:17:02.88 3.00 0.31 5.7 37.5 V - - - 44.0 O1 50 J122010.0+291532 12:20:09.953 +29:15:32.24 3.00 0.22 10.3 37.8 N - - - 88.6 - 51 J122009.9+291741 12:20:09.936 +29:17:40.65 3.00 0.34 5.3 37.4 V - - GCcorr 64.4 - 53 J122009.8+291658 12:20:09.797 +29:16:58.48 3.00 0.29 7.1 37.5 N - P - 39.7 O2 54 J122009.8+291649 12:20:09.778 +29:16:48.81 3.00 0.33 5.5 37.4 N - - - 38.7 - 55 J122009.5+291738 12:20:09.511 +29:17:38.41 3.00 0.41 3.3 37.1 N - - none 59.2 - 56 J122009.4+291634 12:20:09.415 +29:16:34.47 3.00 0.25 7.2 37.6 V - - - 37.6 - 57 J122009.4+291614 12:20:09.413 +29:16:14.25 3.00 0.34 5.0 37.4 N - - - 49.8 - 60 J122009.2+291509 12:20:09.221 +29:15:08.64 3.00 0.47 4.9 37.3 N - - - 106.8 - 62 J122009.2+291643 12:20:09.185 +29:16:43.07 3.00 0.50 3.7 37.0 - - - - 31.8 O2 63 J122009.1+291758 12:20:09.142 +29:17:58.02 3.00 0.19 9.9 37.8 N - P GCcorr 73.8 - 64 J122009.0+291725 12:20:09.012 +29:17:24.59 3.00 0.45 4.1 37.1 - - - none 44.3 O2 65 J122008.9+291702 12:20:08.940 +29:17:01.94 3.00 0.23 8.7 37.6 N - - - 29.9 O2 66 J122008.9+291660 12:20:08.914 +29:16:59.67 3.00 0.18 11.1 37.8 V N P - 28.8 O2 67 J122008.9+291840 12:20:08.856 +29:18:39.70 3.00 0.21 9.8 37.8 N - - - 112.1 - 68 J122008.9+291729 12:20:08.851 +29:17:28.99 3.00 0.17 10.9 38.0 N N N GCcorr 46.5 O1 69 J122008.8+291855 12:20:08.770 +29:18:55.14 3.00 0.32 6.8 37.5 N - - - 126.9 - 70 J122008.8+291645 12:20:08.760 +29:16:44.62 3.00 0.39 3.1 37.2 V - - - 26.1 O1 71 J122008.7+291453 12:20:08.702 +29:14:52.99 3.00 0.30 8.5 37.7 N - P - 120.3 - 72 J122008.7+291432 12:20:08.690 +29:14:32.50 3.00 0.24 13.8 38.0 N - - - 140.4 -

TABLE 3 — Continued

Masterid CXOU Name RA Dec Radius PU S/N Log L_X(0.3−8.0 keV) Variability Opt Corr DG Flag (J2000) (J2000) (^{′′}) (^{′′}) (erg s^{−1}) LT BB K-S (^{′′}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

73 J122008.7+291619 12:20:08.678 +29:16:18.65 3.00 0.20 8.9 37.8 V - - - 40.3 O1 74 J122008.7+291613 12:20:08.662 +29:16:13.20 3.00 0.29 7.4 37.5 V - - - 44.6 O2 75 J122008.6+291820 12:20:08.623 +29:18:20.11 3.00 0.55 3.0 37.1 V - - GCexmt 92.4 - 76 J122008.4+291717 12:20:08.390 +29:17:16.83 3.00 0.16 11.2 38.0 V - - GCcorr 33.2 O1 78 J122008.4+291754 12:20:08.354 +29:17:54.05 3.00 0.17 13.7 38.0 N V N BGexmt 66.4 - 79 J122008.3+291719 12:20:08.338 +29:17:18.82 3.00 - - 37.3 V - - none 34.3 X 80 J122008.2+291628 12:20:08.167 +29:16:27.72 3.00 0.34 5.8 37.4 N - - - 29.0 O2 81 J122008.2+291660 12:20:08.153 +29:16:59.89 3.00 0.27 6.5 37.5 N - - GCcorr 19.6 O2 82 J122008.1+291633 12:20:08.141 +29:16:32.55 3.00 0.48 3.7 37.0 N - - BGexmt 25.1 O2 83 J122008.1+291717 12:20:08.138 +29:17:17.08 3.00 0.16 10.5 38.0 TC - - GCcorr 31.4 O1 84 J122008.1+291644 12:20:08.076 +29:16:43.73 3.00 0.18 11.5 37.9 V - - GCcorr 17.8 O2 85 J122008.0+291642 12:20:08.050 +29:16:41.97 3.00 0.18 10.9 37.8 N - P GCcorr 18.3 O2 86 J122008.0+291654 12:20:08.045 +29:16:54.44 3.00 0.30 5.7 37.4 V - - none 16.4 O2 87 J122008.0+291758 12:20:08.028 +29:17:58.47 3.00 0.30 7.1 37.4 N - - none 69.5 O1 88 J122008.0+291652 12:20:07.994 +29:16:52.20 3.00 0.26 6.6 37.5 N - - GCexmt 15.4 O2 91 J122007.9+291657 12:20:07.930 +29:16:57.20 3.00 0.22 7.5 37.6 PTC - - none 15.8 O2 92 J122007.9+291632 12:20:07.913 +29:16:31.92 3.00 0.49 3.7 37.0 V - - - 23.6 O2 94 J122007.8+291758 12:20:07.848 +29:17:58.03 3.00 0.38 7.2 37.2 V - - none 68.6 O1 96 J122007.8+291720 12:20:07.752 +29:17:20.47 3.00 0.12 27.5 38.6 N N P GCcorr 32.1 - 97 J122007.7+291503 12:20:07.745 +29:15:03.38 3.00 0.43 4.5 37.3 V - - - 108.1 - 98 J122007.7+291644 12:20:07.706 +29:16:44.10 3.00 0.15 15.4 38.1 V - P GCcorr 13.3 O2 99 J122007.7+291654 12:20:07.661 +29:16:53.60 3.00 0.15 12.7 38.0 V N N GCexmt 11.3 O2 100 J122007.5+291634 12:20:07.534 +29:16:33.81 3.00 0.23 7.3 37.7 V - - BGexmt 19.3 O1 101 J122007.5+291654 12:20:07.457 +29:16:53.89 3.00 0.16 9.9 37.9 V - - none 8.8 O2 103 J122007.4+291609 12:20:07.368 +29:16:08.79 3.00 0.18 11.0 37.9 V - P - 42.6 - 104 J122007.3+291656 12:20:07.298 +29:16:56.15 3.00 0.17 8.7 37.8 N - - GCexmt 8.2 O2 106 J122007.2+291652 12:20:07.174 +29:16:52.04 3.00 0.16 8.0 37.8 - - - GCexmt 4.8 O2 107 J122007.2+291410 12:20:07.166 +29:14:10.02 3.00 0.60 4.7 37.3 N - - - 160.8 - 108 J122007.2+291739 12:20:07.164 +29:17:38.74 3.00 0.19 9.4 37.8 V - - GCcorr 48.2 - 109 J122007.1+291639 12:20:07.145 +29:16:39.14 3.00 0.29 4.5 37.5 V - - none 12.4 O1 110 J122007.1+291709 12:20:07.123 +29:17:09.32 3.00 0.22 5.2 37.5 V - - none 19.0 O1 111 J122007.0+291629 12:20:07.042 +29:16:29.13 3.00 0.25 6.3 37.5 V - - - 21.8 - 114 J122006.9+291660 12:20:06.914 +29:16:59.52 3.00 0.16 11.3 37.9 N - - none 8.8 O2 116 J122006.9+291701 12:20:06.900 +29:17:01.22 3.00 0.20 6.6 37.6 - - - none 10.5 O2 117 J122006.8+291651 12:20:06.823 +29:16:50.78 3.00 0.05 218.8 40.3 V V V BGcorr 0.0 O2 NUCLEUS 118 J122006.8+291637 12:20:06.816 +29:16:36.66 3.00 0.14 17.2 38.2 N N N GCcorr 14.1 O2 119 J122006.8+291656 12:20:06.804 +29:16:55.94 3.00 0.10 30.7 38.7 V N N GCexmt 5.2 O2 120 J122006.8+291646 12:20:06.787 +29:16:45.67 3.00 0.12 18.5 38.4 N N N GCexmt 5.1 O2 121 J122006.8+291857 12:20:06.782 +29:18:56.60 3.00 0.33 4.6 37.4 V - - - 125.8 O1 123 J122006.7+291646 12:20:06.691 +29:16:45.92 3.00 - - 38.0 V - - none 5.2 X 124 J122006.6+291641 12:20:06.629 +29:16:41.22 3.00 0.16 9.6 37.8 N - - GCexmt 9.9 O2 125 J122006.6+291714 12:20:06.607 +29:17:14.21 3.00 0.21 7.1 37.6 N - - GCexmt 23.6 O1 126 J122006.6+291629 12:20:06.552 +29:16:29.32 3.00 0.32 5.0 37.5 N - - - 21.7 O1 127 J122006.5+291706 12:20:06.538 +29:17:05.98 3.00 0.24 6.6 37.5 N - - GCexmt 15.7 O2 128 J122006.5+291645 12:20:06.514 +29:16:44.84 3.00 0.17 7.6 37.7 - - - BGcorr 7.2 O2 129 J122006.5+291659 12:20:06.504 +29:16:58.65 3.00 0.19 8.3 37.7 V - - BGcorr 8.9 O2 130 J122006.4+291624 12:20:06.439 +29:16:23.58 3.00 0.33 5.4 37.4 V - - - 27.7 - 131 J122006.4+291709 12:20:06.434 +29:17:08.64 3.00 0.38 4.0 37.1 V - - none 18.6 O2 132 J122006.4+291649 12:20:06.398 +29:16:48.61 3.00 0.14 11.3 38.0 V V V BGexmt 6.0 O2 133 J122006.4+291843 12:20:06.372 +29:18:43.14 3.00 0.17 15.9 38.1 N N N - 112.5 - 134 J122006.3+291710 12:20:06.324 +29:17:09.91 3.00 0.26 6.6 37.4 V - - GCcorr 20.2 O2 135 J122006.3+291644 12:20:06.324 +29:16:43.66 3.00 0.19 8.3 37.7 - - - GCexmt 9.7 O2 137 J122006.3+291656 12:20:06.283 +29:16:56.06 3.00 0.21 8.1 37.6 V - - GCexmt 8.8 O2 138 J122006.2+291651 12:20:06.245 +29:16:51.30 3.00 0.21 6.3 37.5 - - - none 7.6 O2 139 J122006.2+291658 12:20:06.218 +29:16:57.53 3.00 0.16 10.9 37.8 TC - - GCexmt 10.4 O2

TABLE 3 — Continued

Masterid CXOU Name RA Dec Radius PU S/N Log L_X(0.3−8.0 keV) Variability Opt Corr DG Flag (J2000) (J2000) (^{′′}) (^{′′}) (erg s^{−1}) LT BB K-S (^{′′}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

140 J122006.2+291631 12:20:06.218 +29:16:31.45 3.00 0.15 15.6 38.1 V V - - 20.9 O2 141 J122006.2+291608 12:20:06.206 +29:16:08.48 3.00 0.24 6.7 37.6 V - P - 43.1 O1 142 J122006.1+291414 12:20:06.149 +29:14:14.32 3.00 0.59 4.8 37.3 N - - - 156.7 - 143 J122006.1+291813 12:20:06.098 +29:18:13.47 3.00 0.22 7.9 37.6 V - P none 83.2 - 144 J122006.1+291601 12:20:06.082 +29:16:00.64 3.00 0.34 3.6 37.2 N - - - 51.1 O1 145 J122006.1+291637 12:20:06.060 +29:16:36.54 3.00 0.33 3.7 37.4 - - - BGexmt 17.4 O1 146 J122006.0+291648 12:20:06.031 +29:16:48.39 3.00 0.11 31.3 38.7 V N V none 10.6 O2 147 J122006.0+291651 12:20:05.998 +29:16:50.53 3.00 0.13 17.2 38.2 V - V BGcorr 10.8 O2 148 J122005.9+291709 12:20:05.945 +29:17:08.92 3.00 0.14 15.7 38.1 N N P GCcorr 21.5 O2 149 J122005.9+291652 12:20:05.921 +29:16:51.81 3.00 - - 37.7 V - - GCexmt 11.8 X 150 J122005.9+291605 12:20:05.914 +29:16:05.39 3.00 0.42 4.4 37.1 - - - - 46.9 O2 152 J122005.7+291710 12:20:05.729 +29:17:09.97 3.00 0.39 4.1 37.1 V - - GCexmt 24.0 O2 153 J122005.7+291659 12:20:05.717 +29:16:59.06 3.00 0.40 3.1 37.2 V - - GCcorr 16.7 double? 154 J122005.7+291650 12:20:05.698 +29:16:49.97 3.00 0.14 13.6 38.0 N - P GCcorr 14.7 O2 155 J122005.7+291555 12:20:05.681 +29:15:55.36 3.00 0.20 9.7 37.8 N - - - 57.4 - 156 J122005.7+291716 12:20:05.669 +29:17:15.89 3.00 0.26 3.9 37.4 PTC - - none 29.3 O1 157 J122005.5+291706 12:20:05.508 +29:17:05.58 3.00 0.14 13.3 38.1 V - P GCexmt 22.7 O1 158 J122005.5+291641 12:20:05.486 +29:16:40.77 3.00 0.11 26.3 38.7 V N P GCexmt 20.2 O1 159 J122005.4+291717 12:20:05.388 +29:17:17.01 3.00 0.35 4.4 37.2 PTC - - none 32.3 O2 160 J122005.3+291610 12:20:05.335 +29:16:10.33 3.00 0.23 7.8 37.6 V - - none 44.9 - 162 J122005.2+291653 12:20:05.234 +29:16:52.74 3.00 0.21 7.7 37.6 V - - GCcorr 20.9 - 163 J122005.2+291640 12:20:05.230 +29:16:39.93 3.00 0.12 17.8 38.4 V N P GCcorr 23.5 O1 164 J122005.2+291539 12:20:05.218 +29:15:38.84 3.00 0.34 4.7 37.3 N - - - 74.9 - 165 J122005.1+291715 12:20:05.083 +29:17:15.30 3.00 0.25 6.5 37.4 N - - GCcorr 33.5 O2 166 J122005.0+291704 12:20:05.021 +29:17:03.89 3.00 0.22 7.6 37.6 N - P GCexmt 27.0 - 167 J122004.9+291602 12:20:04.855 +29:16:01.67 3.00 0.38 4.9 37.2 N - - GCcorr 55.4 O2 168 J122004.9+291714 12:20:04.853 +29:17:14.43 3.00 0.30 5.0 37.3 N - - GCexmt 35.0 O2 169 J122004.8+291737 12:20:04.798 +29:17:37.33 3.00 0.16 9.7 37.8 V - V none 53.6 - 170 J122004.8+291728 12:20:04.793 +29:17:28.46 3.00 0.18 8.3 37.7 N - P GCexmt 46.1 - 171 J122004.8+291744 12:20:04.769 +29:17:43.57 3.00 0.24 5.7 37.4 N - - GCexmt 59.2 - 172 J122004.7+291607 12:20:04.699 +29:16:07.33 3.00 0.46 3.3 37.2 N - - GCcorr 51.6 O1 179 J122004.5+291612 12:20:04.531 +29:16:12.18 3.00 0.21 9.2 37.7 V - - GCcorr 48.9 O2 181 J122004.5+291602 12:20:04.469 +29:16:01.79 3.00 0.28 5.1 37.4 N - - none 57.9 O1 182 J122004.5+291648 12:20:04.457 +29:16:48.22 3.00 0.27 6.1 37.4 V - - none 31.1 O2 183 J122004.3+291421 12:20:04.337 +29:14:21.38 3.00 0.41 5.9 37.5 N - - - 152.9 - 184 J122004.3+291736 12:20:04.330 +29:17:36.01 3.00 0.10 31.8 38.7 V N N GCexmt 55.8 - 185 J122004.2+291651 12:20:04.229 +29:16:51.49 3.00 0.12 18.5 38.4 V N N GCcorr 33.9 O1 186 J122004.1+291624 12:20:04.142 +29:16:23.61 3.00 0.28 4.4 37.3 V - - none 44.4 - 187 J122004.1+291615 12:20:04.102 +29:16:15.24 3.00 0.17 9.7 37.8 V - - GCcorr 50.3 - 189 J122003.8+291638 12:20:03.830 +29:16:37.96 3.00 0.17 8.7 37.8 V - P BGcorr 41.2 O1 190 J122003.8+291610 12:20:03.773 +29:16:09.71 3.00 0.19 9.7 37.8 N - - GCcorr 57.3 - 191 J122003.7+291630 12:20:03.727 +29:16:29.85 3.00 0.19 7.9 37.6 N - - GCcorr 45.6 - 192 J122003.7+291720 12:20:03.710 +29:17:19.72 3.00 0.32 3.4 37.1 V - - none 50.0 - 193 J122003.5+291618 12:20:03.545 +29:16:17.61 3.00 0.37 3.0 37.1 N - - GCcorr 54.2 - 194 J122003.4+291640 12:20:03.434 +29:16:39.50 3.00 0.12 21.1 38.4 V N V GCcorr 45.7 O1 195 J122003.3+291743 12:20:03.278 +29:17:42.94 3.00 0.16 8.7 37.7 N - - none 69.8 - 196 J122003.2+291405 12:20:03.202 +29:14:05.22 3.00 0.92 4.4 37.3 - - - - 172.2 - 197 J122003.2+291632 12:20:03.170 +29:16:31.98 3.00 0.27 5.4 37.4 V - P BGexmt 51.3 - 199 J122002.5+291625 12:20:02.486 +29:16:24.73 3.00 0.34 3.6 37.2 V - - GCcorr 62.4 - 201 J122002.1+291550 12:20:02.098 +29:15:50.08 3.00 0.36 4.3 37.3 V - - - 86.6 - 202 J122002.0+291730 12:20:01.999 +29:17:29.79 3.00 0.17 7.5 37.6 N - - GCcorr 74.2 - 203 J122001.9+291758 12:20:01.850 +29:17:58.29 3.00 0.23 6.4 37.5 N - - GCcorr 93.8 - 204 J122001.6+291626 12:20:01.582 +29:16:26.16 3.00 0.14 16.6 38.2 TC - - none 72.9 - 205 J122001.4+291704 12:20:01.428 +29:17:04.43 3.00 0.19 6.6 37.5 N - - none 71.9 - 206 J122001.3+291656 12:20:01.344 +29:16:55.94 3.00 0.33 3.4 37.1 N - - none 71.9 -

TABLE 3 — Continued

Masterid CXOU Name RA Dec Radius PU S/N Log L_X(0.3−8.0 keV) Variability Opt Corr DG Flag (J2000) (J2000) (^{′′}) (^{′′}) (erg s^{−1}) LT BB K-S (^{′′}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

208 J122001.1+291724 12:20:01.085 +29:17:23.50 3.00 0.26 4.5 37.3 N - - GCcorr 81.9 - 209 J122000.9+291515 12:20:00.931 +29:15:15.11 3.00 0.20 12.1 37.9 N - P - 122.9 - 210 J122000.7+291748 12:20:00.746 +29:17:48.14 3.00 0.27 5.7 37.3 N - - none 98.0 O2 211 J122000.7+291529 12:20:00.746 +29:15:29.05 3.00 0.34 5.4 37.4 V - - - 114.0 - 213 J122000.6+291808 12:20:00.598 +29:18:08.47 3.00 0.21 6.9 37.6 V - - BGcorr 112.6 O1 214 J122000.4+291746 12:20:00.398 +29:17:46.12 3.00 0.45 3.1 36.9 - - - GCcorr 100.6 O2 216 J122000.3+291705 12:20:00.314 +29:17:05.06 3.00 0.17 7.9 37.6 N - - GCcorr 86.3 - 217 J122000.3+291812 12:20:00.274 +29:18:12.25 3.00 0.29 4.4 37.3 V - - GCcorr 118.2 O1 219 J121959.7+291612 12:19:59.678 +29:16:12.45 3.00 0.37 3.2 37.1 N - - - 101.0 - 220 J121959.7+291426 12:19:59.666 +29:14:25.63 3.00 0.22 16.8 38.2 V - P - 172.7 - 223 J121958.6+291544 12:19:58.565 +29:15:43.66 3.00 0.28 6.9 37.5 V - - - 127.2 - 225 J121958.5+291608 12:19:58.490 +29:16:08.16 3.00 0.17 11.7 37.9 N - P - 117.0 - 226 J121958.2+291836 12:19:58.174 +29:18:36.41 3.00 0.33 4.9 37.3 V - - - 154.8 - 227 J121958.1+291712 12:19:58.099 +29:17:11.81 3.00 0.14 15.5 38.1 V V V - 116.1 O1 228 J121957.7+291715 12:19:57.708 +29:17:14.56 3.00 0.13 19.9 38.3 V - - - 121.6 O1 229 J121957.6+291725 12:19:57.634 +29:17:24.93 3.00 0.17 10.6 37.8 N - - - 125.0 - 230 J121957.1+291620 12:19:57.108 +29:16:19.64 3.00 0.23 8.2 37.7 V - - - 130.9 - 231 J121956.9+291639 12:19:56.858 +29:16:38.77 3.00 0.21 9.0 37.7 V - - - 130.9 - 232 J121956.7+291631 12:19:56.690 +29:16:31.35 3.00 0.37 3.2 37.2 V - - - 134.0 O1 233 J121956.4+291637 12:19:56.419 +29:16:37.02 3.00 0.30 4.7 37.4 N - - - 136.8 O1 234 J121956.4+291633 12:19:56.405 +29:16:33.40 3.00 0.36 5.2 37.3 N - - - 137.4 O2 236 J121955.0+291654 12:19:55.042 +29:16:53.58 3.00 0.73 3.2 37.1 - - - - 154.2 -

Master Source List for sources with S/N<3

3 J122022.6+291551 12:20:22.589 +29:15:51.22 4.02 1.03 0.7 36.5 (≤37.1) - - - - 214.7 O1 6 J122022.2+291554 12:20:22.236 +29:15:54.36 3.94 1.06 1.5 36.9 (≤37.2) - - - - 209.4 O1 7 J122020.9+291647 12:20:20.904 +29:16:46.88 3.49 - - 36.7 (≤37.9) N - - - 184.3 X 10 J122018.1+291555 12:20:18.077 +29:15:55.01 3.15 1.00 1.0 36.5 (≤37.0) - - - - 157.4 - 12 J122017.8+291440 12:20:17.762 +29:14:39.96 3.67 - - 36.3 (≤36.9) N - - - 193.9 X 18 J122016.1+291718 12:20:16.121 +29:17:18.40 3.00 - - 36.5 (≤37.0) N - - - 124.7 X 20 J122015.5+291519 12:20:15.538 +29:15:19.16 3.00 0.73 2.6 37.0 (≤37.3) - - - - 146.3 - 22 J122014.7+291741 12:20:14.702 +29:17:41.07 3.00 0.67 2.7 37.0 (≤37.3) N - - - 114.7 - 25 J122014.5+291751 12:20:14.462 +29:17:50.62 3.00 0.68 2.5 37.0 (≤37.3) - - - - 116.5 - 33 J122012.4+291707 12:20:12.439 +29:17:07.43 3.00 0.65 1.7 36.8 (≤37.1) - - - - 75.4 - 34 J122012.4+291438 12:20:12.410 +29:14:37.93 3.00 1.07 2.2 36.8 (≤37.1) N - - - 151.6 O2 37 J122011.8+291515 12:20:11.767 +29:15:14.71 3.00 0.63 2.7 37.0 (≤37.3) V - - - 115.8 - 47 J122010.1+291646 12:20:10.068 +29:16:46.19 3.00 - - 37.0 (≤37.2) N - - - 42.7 X 49 J122010.0+291427 12:20:09.998 +29:14:27.46 3.00 1.00 2.5 37.0 (≤37.2) - - - - 149.2 - 52 J122009.8+291655 12:20:09.811 +29:16:54.99 3.00 0.49 1.5 36.9 (≤37.2) - - - none 39.3 O1 58 J122009.4+291723 12:20:09.401 +29:17:23.41 3.00 0.49 1.8 36.9 (≤37.2) N - - none 46.9 O1 59 J122009.4+291645 12:20:09.401 +29:16:45.06 3.00 0.41 2.7 37.2 (≤37.4) V - - - 34.2 O1 61 J122009.2+291707 12:20:09.214 +29:17:06.62 3.00 - - 36.9 (≤37.2) N - - none 35.1 X 77 J122008.4+291614 12:20:08.378 +29:16:13.85 3.00 0.56 1.4 36.8 (≤37.2) - - - - 42.2 O1 89 J122008.0+291603 12:20:07.994 +29:16:03.25 3.00 - - 36.4 (≤36.9) N - - - 49.9 X 90 J122007.9+291546 12:20:07.939 +29:15:45.69 3.00 0.46 2.6 37.0 (≤37.3) - - - - 66.7 - 93 J122007.9+291727 12:20:07.862 +29:17:27.48 3.00 0.61 2.7 37.0 (≤37.3) - - - GCexmt 39.1 - 95 J122007.8+291537 12:20:07.800 +29:15:37.33 3.00 0.64 1.5 36.7 (≤37.1) - - - - 74.5 - 102 J122007.4+291708 12:20:07.442 +29:17:07.63 3.00 0.36 2.0 37.0 (≤37.4) - - - none 18.7 O1 105 J122007.2+291648 12:20:07.250 +29:16:47.90 3.00 - - 37.6 (≤37.7) V - P GCexmt 6.3 X 112 J122007.0+291852 12:20:06.986 +29:18:52.41 3.00 0.61 1.0 36.5 (≤37.0) N - - - 121.7 O1 113 J122006.9+291726 12:20:06.941 +29:17:25.59 3.00 0.45 1.5 36.8 (≤37.1) V - - GCexmt 34.8 - 115 J122006.9+291622 12:20:06.902 +29:16:22.23 3.00 0.35 3.0 37.1 (≤37.4) N - - - 28.6 - 122 J122006.8+291809 12:20:06.763 +29:18:08.55 3.00 0.42 2.5 37.0 (≤37.2) N - - none 77.8 - 136 J122006.3+291715 12:20:06.283 +29:17:15.03 3.00 - - 37.1 (≤37.3) N - - GCexmt 25.3 X

TABLE 3 — Continued

Masterid CXOU Name RA Dec Radius PU S/N Log L_X(0.3−8.0 keV) Variability Opt Corr DG Flag (J2000) (J2000) (^{′′}) (^{′′}) (erg s^{−1}) LT BB K-S (^{′′}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14)

151 J122005.9+291822 12:20:05.899 +29:18:21.52 3.00 0.39 2.6 37.0 (≤37.3) N - - GCexmt 91.5 - 161 J122005.3+291602 12:20:05.256 +29:16:01.68 3.00 0.44 2.3 37.0 (≤37.3) - - - GCcorr 53.2 O1 173 J122004.6+291634 12:20:04.618 +29:16:34.48 3.00 - - 36.8 (≤37.0) V - - GCcorr 33.1 X 174 J122004.6+291615 12:20:04.594 +29:16:15.37 3.00 0.32 2.6 37.1 (≤37.4) N - - GCcorr 45.9 O1 175 J122004.6+291714 12:20:04.562 +29:17:14.47 3.00 0.27 2.8 37.2 (≤37.4) V - - none 37.9 O1 176 J122004.6+291820 12:20:04.555 +29:18:20.19 3.00 0.44 2.0 36.8 (≤37.2) N - - GCexmt 94.2 - 177 J122004.5+291625 12:20:04.538 +29:16:24.95 3.00 - - 37.0 (≤37.2) N - - GCexmt 39.5 X 178 J122004.5+291637 12:20:04.534 +29:16:36.89 3.00 0.44 2.9 37.1 (≤37.4) V - - none 33.0 - 180 J122004.5+291644 12:20:04.522 +29:16:44.12 3.00 0.41 2.6 37.1 (≤37.4) - - - GCexmt 30.8 O1 188 J122004.1+291744 12:20:04.075 +29:17:43.57 3.00 0.44 1.6 36.7 (≤37.1) - - - none 63.9 - 198 J122003.0+291815 12:20:02.978 +29:18:14.96 3.00 0.50 1.9 36.8 (≤37.1) - - - GCexmt 98.1 - 200 J122002.2+291526 12:20:02.222 +29:15:26.02 3.00 0.58 1.9 36.8 (≤37.2) - - - - 103.9 - 207 J122001.3+291609 12:20:01.325 +29:16:09.05 3.00 0.44 1.6 36.7 (≤37.1) - - - none 83.2 - 212 J122000.7+291753 12:20:00.660 +29:17:53.04 3.00 0.40 2.3 37.0 (≤37.3) - - - none 101.9 O1 215 J122000.3+291722 12:20:00.348 +29:17:21.98 3.00 0.33 2.9 37.0 (≤37.3) - - - GCcorr 90.3 - 218 J122000.1+291750 12:20:00.120 +29:17:49.81 3.00 0.40 2.4 37.0 (≤37.3) - - - BGexmt 105.7 O1 221 J121959.3+291847 12:19:59.282 +29:18:47.34 - - - 36.6 (≤37.0) N - - - 152.7 X 222 J121959.2+291901 12:19:59.213 +29:19:01.05 - - - 36.5 (≤37.0) N - - - 164.0 X 224 J121958.5+291642 12:19:58.517 +29:16:42.09 - - - 37.1 (≤37.3) V - - - 109.0 X 235 J121956.4+291804 12:19:56.393 +29:18:03.67 3.00 0.70 1.1 36.5 (≤37.0) N - - - 154.7 -

NOTE. — Table has been divided into two parts. The first part lists all sources with S/N >3, in at least one observation. The second section lists the remaining sources, that have S/N <3 in all observations. Col. (1): source number, col. (2): IAU name (following the convention “CXOU Jhhmmss.s+/−ddmmss”), cols. (3) and (4): right ascension and declination, col. (5): source extraction radius in arcseconds, col. (6): position uncertainty (from section 2.2, equation 1), col. (7): signal-to-noise ratio, col. (8): log L_X (0.3−8.0 keV) assuming D=16.1 Mpc (for the sources with S/N<3, 3σ upper limits are also quoted in brackets). For sources only detected in a single observation, 1σ upper limits from the co-added observation are quoted (with 3σ upper limits from the detected observatioin presented in brackets), col. (9): long-term source variability - (N) indicates non-variable sources, (V) indicates variable sources, (TC) transient candidates, (PTC) possible transients, cols. (10) and (11): short-term variability, where (BB) indicates Bayesian block analysis and (K-S) indicates the Kolmogorov-Smirnov test, in both columns symbols indicate - (N) non-variable in all observations, (V) variable in at least one observation, (P) possible variability in at least one observation, col. (12): optical associations - ‘GC’ indicates that the optical source is a confirmed globular cluster, ‘BG’ indicates that optical source is a background objects. ‘corr’ denotes matches that have been defined as correlations, and ‘exmt’ denotes matches between 0.8^{′′} and 3^{′′} in separation, ‘none’ indicates sources inside the field of view of the HST observation, but have no optical counterpart. All other sources are external to the HST FOV. Col. (13): distance from the galactic center (in arcseconds), where values in bold type face indicate sources that lie within the D_{25} ellipse. Col. (14): flag information - (X) sources detected in a single observation only, O1 and O2 overlapping sources (single and complicated cases respectively) and (double?) possible double sources.

TABLE 4 SOURCE COUNTS, HARDNESS RATIOS AND COLOR-COLOR VALUES: COADDED OBSERVATION

MID Net Counts HR C21 C32 Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12)

1 139.8±15.2 -2.3±4.7 48.0±8.9 45.6±9.7 94.2±12.2 39.1±8.4 103.4±12.7 0.40^{+0.09}_{−0.09} -1.42^{+0.60}_{−0.80} -0.26^{+0.09}_{−0.09} 37.8 2 386.2±24.4 57.5±9.6 237.4±17.0 294.9±19.1 91.8±12.4 258.6±17.7 117.5±13.7 -0.42^{+0.04}_{−0.06} -0.54^{+0.08}_{−0.07} 0.44^{+0.05}_{−0.07} 38.2 3 7.8±11.2 -0.8±5.0 9.5±6.1 8.7±7.4 -1.6±6.5 10.3±6.5 -2.3±6.7 -0.75^{+0.22}_{−0.25} -0.49^{+0.57}_{−1.02} 0.63^{+0.86}_{−0.72} 36.5 4 266.1±21.1 78.8±10.7 145.3±13.8 224.1±17.0 42.2±9.8 195.7±15.7 58.1±10.9 -0.58^{+0.06}_{−0.06} -0.17^{+0.06}_{−0.07} 0.55^{+0.11}_{−0.08} 38.1 5 725.7±29.1 202.2±15.8 398.3±21.3 600.5±26.1 125.2±13.6 508.6±24.0 174.7±15.5 -0.53^{+0.03}_{−0.03} -0.21^{+0.03}_{−0.04} 0.52^{+0.06}_{−0.04} 38.5 6 17.5±11.7 -6.7±4.1 9.1±5.9 2.5±6.7 14.4±7.6 4.7±5.8 17.9±8.1 0.59^{+0.41}_{−0.19} -0.90^{+0.74}_{−0.95} -0.21^{+0.45}_{−0.36} 36.9 7 ≤10.8 - - - - - - - - - ≤36.7 8 128.6±14.5 32.9±7.7 76.6±10.5 109.6±12.6 19.0±7.9 93.8±11.4 30.1±8.9 -0.56^{+0.09}_{−0.11} -0.28^{+0.11}_{−0.10} 0.63^{+0.18}_{−0.19} 37.7 9 46.7±11.6 16.4±6.6 23.6±7.3 40.0±9.4 6.7±7.2 34.9±8.3 9.4±7.8 -0.67^{+0.11}_{−0.33} -0.09^{+0.22}_{−0.18} 0.53^{+0.53}_{−0.44} 37.3 10 7.7±7.8 4.9±4.7 5.1±5.0 10.1±6.4 -2.4±5.1 9.4±5.7 -2.7±5.3 -0.80^{+0.19}_{−0.20} 0.15^{+0.61}_{−0.72} 0.34^{+1.17}_{−0.64} 36.5 11 67.4±11.1 5.9±4.8 33.3±7.5 39.2±8.5 28.2±7.7 31.0±7.5 36.7±8.4 0.02^{+0.15}_{−0.14} -0.61^{+0.26}_{−0.40} 0.08^{+0.16}_{−0.11} 37.5 12 ≤4.9 - - - - - - - - - ≤36.3 13 1110.4±35.2 282.0±18.2 603.8±25.9 885.8±31.2 224.6±16.8 767.1±29.0 299.5±19.1 -0.49^{+0.03}_{−0.03} -0.25^{+0.03}_{−0.03} 0.46^{+0.03}_{−0.04} 38.7 14 258.4±18.5 68.8±9.9 135.0±13.2 203.9±16.1 54.6±9.8 179.6±14.9 69.5±10.8 -0.49^{+0.06}_{−0.07} -0.22^{+0.08}_{−0.06} 0.42^{+0.08}_{−0.08} 38.1 15 80.6±11.8 11.9±5.4 44.3±8.3 56.2±9.5 24.4±7.5 48.3±8.7 31.4±8.2 -0.27^{+0.13}_{−0.13} -0.47^{+0.14}_{−0.23} 0.28^{+0.16}_{−0.12} 37.6 16 31.9±9.3 5.8±4.8 14.3±5.9 20.1±7.1 11.8±6.5 10.8±5.8 17.0±7.1 0.17^{+0.30}_{−0.30} -0.26^{+0.33}_{−0.43} 0.03^{+0.37}_{−0.22} 37.1 17 159.3±15.7 24.1±7.2 94.3±11.4 118.3±13.1 40.9±9.2 107.5±12.2 53.0±10.1 -0.39^{+0.09}_{−0.08} -0.51^{+0.12}_{−0.13} 0.42^{+0.08}_{−0.13} 37.8 18 ≤7.0 - - - - - - - - - ≤36.5 19 56.7±10.5 10.1±5.3 39.5±7.9 49.6±9.1 7.1±5.9 45.8±8.5 10.2±6.4 -0.70^{+0.17}_{−0.16} -0.53^{+0.24}_{−0.18} 0.70^{+0.43}_{−0.26} 37.4 20 22.4±8.6 12.2±5.6 6.1±5.0 18.4±7.0 4.1±5.6 18.1±6.5 3.3±5.7 -0.74^{+0.13}_{−0.26} 0.38^{+0.38}_{−0.40} 0.05^{+0.89}_{−0.52} 37.0 21 35.3±9.4 6.9±4.8 18.9±6.4 25.8±7.5 9.5±6.3 22.1±6.8 13.5±6.8 -0.33^{+0.27}_{−0.24} -0.33^{+0.27}_{−0.33} 0.30^{+0.35}_{−0.31} 37.2 22 22.8±8.6 7.4±5.1 15.0±5.9 22.4±7.3 0.3±5.1 21.9±6.7 0.6±5.3 -0.89^{+0.09}_{−0.11} -0.13^{+0.22}_{−0.42} 0.81^{+0.75}_{−0.58} 37.0 23 45.2±9.8 14.6±5.8 26.4±6.9 41.0±8.5 4.2±5.6 38.8±8.0 5.5±5.9 -0.82^{+0.09}_{−0.18} -0.12^{+0.11}_{−0.24} 0.72^{+0.56}_{−0.40} 37.3 24 38.3±9.6 3.6±4.4 16.4±6.1 20.0±7.1 18.3±7.0 10.9±5.7 24.7±7.6 0.35^{+0.23}_{−0.24} -0.54^{+0.45}_{−0.51} -0.03^{+0.22}_{−0.19} 37.2 25 20.9±8.3 1.1±4.1 18.2±6.2 19.3±7.0 1.6±5.1 17.5±6.3 6.8±5.9 -0.56^{+0.14}_{−0.44} -0.95^{+0.65}_{−0.60} 0.82^{+0.79}_{−0.48} 37.0 26 78.9±11.6 1.4±4.1 52.1±8.9 53.4±9.4 25.5±7.5 45.2±8.5 30.8±8.1 -0.25^{+0.14}_{−0.13} -1.15^{+0.41}_{−0.78} 0.32^{+0.15}_{−0.11} 37.5 27 25.0±5.4 3.7±4.3 12.7±5.4 16.3±6.5 9.5±5.7 12.8±5.7 11.1±6.0 -0.16^{+0.32}_{−0.30} -0.40^{+0.41}_{−0.53} 0.20^{+0.27}_{−0.33} 37.0 28 27.0±5.9 4.1±4.4 12.9±5.6 17.0±6.6 9.2±5.8 13.2±5.8 12.5±6.3 -0.10^{+0.30}_{−0.30} -0.40^{+0.42}_{−0.49} 0.10^{+0.37}_{−0.26} 37.1 29 106.9±12.9 15.9±5.9 61.4±9.4 77.3±10.7 29.7±7.8 66.4±9.8 37.9±8.5 -0.33^{+0.11}_{−0.11} -0.51^{+0.13}_{−0.16} 0.32^{+0.15}_{−0.09} 37.7 30 29.5±9.1 8.7±5.2 11.8±5.7 20.5±7.2 9.0±6.1 12.9±6.0 14.8±6.8 0.01^{+0.30}_{−0.30} 0.02^{+0.24}_{−0.37} 0.15^{+0.39}_{−0.36} 37.1 31 454.7±23.1 97.2±11.2 254.4±17.3 351.7±20.2 103.1±11.9 292.7±18.4 151.6±14.0 -0.37^{+0.04}_{−0.05} -0.35^{+0.07}_{−0.04} 0.42^{+0.05}_{−0.05} 38.3 32 19.1±8.5 23.1±6.8 -3.0±3.6 20.0±7.3 -1.0±5.0 5.5±5.3 -0.9±5.2 -0.57^{+0.35}_{−0.43} 1.37^{+0.96}_{−0.49} -0.31^{+1.16}_{−1.05} 36.9 33 14.2±8.2 11.6±5.7 1.3±4.3 12.9±6.6 1.3±5.3 8.1±5.6 1.6±5.6 -0.62^{+0.27}_{−0.38} 0.67^{+0.82}_{−0.49} -0.04^{+0.98}_{−1.05} 36.8 34 13.0±5.9 5.5±4.0 4.3±3.8 9.8±5.0 3.2±4.0 3.8±3.8 3.5±4.1 -0.14^{+0.47}_{−0.49} 0.16^{+0.43}_{−0.37} 0.11^{+0.67}_{−0.51} 36.7 35 167.1±15.2 28.0±7.1 97.0±11.3 125.0±13.0 42.0±8.6 113.6±12.2 52.8±9.4 -0.42^{+0.08}_{−0.08} -0.46^{+0.11}_{−0.10} 0.38^{+0.10}_{−0.08} 37.9 36 33.4±9.5 13.6±5.8 20.2±6.5 33.7±8.3 -0.4±5.3 28.0±7.4 2.3±5.9 -0.87^{+0.09}_{−0.13} -0.11^{+0.21}_{−0.19} 0.92^{+0.80}_{−0.57} 37.2 37 23.5±8.7 6.9±5.1 16.2±6.1 23.2±7.5 0.4±5.1 23.8±7.0 1.2±5.4 -0.89^{+0.10}_{−0.11} -0.29^{+0.30}_{−0.37} 0.77^{+0.84}_{−0.49} 37.0 38 64.3±9.7 20.6±5.9 31.3±6.9 51.8±8.6 12.5±5.2 36.6±7.4 20.8±6.2 -0.33^{+0.12}_{−0.14} -0.09^{+0.13}_{−0.13} 0.42^{+0.18}_{−0.15} 37.4 39 139.8±13.4 37.6±7.5 69.3±9.6 106.8±11.7 33.0±7.3 88.2±10.7 45.2±8.3 -0.37^{+0.08}_{−0.09} -0.17^{+0.08}_{−0.10} 0.35^{+0.10}_{−0.10} 37.8 40 126.8±12.8 23.7±6.3 72.5±9.8 96.2±11.2 30.5±7.1 83.4±10.4 38.9±7.8 -0.42^{+0.09}_{−0.08} -0.44^{+0.14}_{−0.07} 0.40^{+0.11}_{−0.09} 37.7 41 662.3±27.5 126.5±12.7 379.6±20.7 506.1±23.9 156.1±14.2 426.4±22.0 213.0±16.3 -0.39^{+0.04}_{−0.03} -0.40^{+0.05}_{−0.04} 0.41^{+0.05}_{−0.04} 38.4 42 430.0±22.5 96.9±11.3 244.4±16.9 341.3±19.9 88.8±11.2 296.9±18.6 115.8±12.6 -0.49^{+0.05}_{−0.04} -0.34^{+0.08}_{−0.03} 0.46^{+0.06}_{−0.05} 38.3 43 141.4±14.4 36.3±7.8 74.9±10.3 111.2±12.5 30.2±7.8 103.7±11.8 32.3±8.2 -0.57^{+0.08}_{−0.08} -0.22^{+0.09}_{−0.10} 0.40^{+0.14}_{−0.09} 37.8 44 30.4±9.0 4.3±4.4 16.5±6.1 20.9±7.1 9.5±6.1 19.1±6.4 11.2±6.5 -0.35^{+0.31}_{−0.26} -0.41^{+0.33}_{−0.51} 0.34^{+0.22}_{−0.42} 37.1 45 35.6±9.4 2.2±4.4 18.9±6.4 21.1±7.3 14.5±6.5 10.8±5.9 24.5±7.5 0.36^{+0.26}_{−0.25} -0.64^{+0.42}_{−0.72} 0.15^{+0.23}_{−0.22} 37.2 46 39.2±10.0 6.2±5.5 28.1±7.2 34.4±8.6 4.9±5.7 29.0±7.8 7.1±6.1 -0.69^{+0.11}_{−0.31} -0.62^{+0.41}_{−0.34} 0.78^{+0.43}_{−0.47} 37.2

TABLE 4 — Continued

MID Net Counts HR C21 C32 Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12)

47 ≤23.6 - - - - - - - - - ≤37.0 48 72.4±12.7 23.1±7.0 40.0±8.2 63.1±10.3 8.3±6.3 54.8±9.4 10.4±6.7 -0.74^{+0.14}_{−0.17} -0.18^{+0.16}_{−0.12} 0.59^{+0.47}_{−0.20} 37.5 49 20.8±8.4 3.1±4.4 20.3±6.5 23.4±7.4 -2.6±4.7 17.5±6.4 4.7±5.8 -0.66^{+0.15}_{−0.34} -0.59^{+0.35}_{−0.67} 1.07^{+0.92}_{−0.46} 37.0 50 151.3±14.7 37.9±7.9 85.7±10.8 123.6±13.0 27.7±7.7 106.5±11.9 39.9±8.7 -0.50^{+0.08}_{−0.09} -0.28^{+0.11}_{−0.08} 0.51^{+0.13}_{−0.11} 37.8 51 57.5±10.8 15.2±6.1 35.9±7.8 51.1±9.5 6.4±5.8 45.7±8.7 10.0±6.4 -0.70^{+0.15}_{−0.18} -0.30^{+0.19}_{−0.16} 0.78^{+0.43}_{−0.36} 37.4 52 17.9±11.6 4.8±5.5 14.5±6.4 19.3±7.9 -1.9±5.3 18.0±7.2 -2.5±5.7 -0.89^{+0.11}_{−0.11} -0.29^{+0.40}_{−0.57} 0.77^{+0.94}_{−0.49} 36.9 53 75.6±10.6 17.2±5.8 33.8±7.2 51.0±8.8 24.7±6.6 34.7±7.5 31.7±7.3 -0.11^{+0.14}_{−0.12} -0.21^{+0.14}_{−0.15} 0.16^{+0.14}_{−0.11} 37.5 54 63.1±11.5 20.1±6.9 33.9±7.8 54.0±10.0 9.1±6.3 40.2±8.7 16.8±7.2 -0.47^{+0.17}_{−0.18} -0.17^{+0.17}_{−0.14} 0.62^{+0.28}_{−0.34} 37.4 55 30.7±9.3 9.3±5.4 17.3±6.4 26.6±7.9 4.1±5.6 23.1±7.1 6.8±6.1 -0.64^{+0.12}_{−0.36} -0.18^{+0.27}_{−0.28} 0.47^{+0.66}_{−0.32} 37.1 56 94.4±13.0 17.1±6.7 62.9±9.8 80.0±11.4 14.4±6.8 66.9±10.4 26.8±8.0 -0.48^{+0.11}_{−0.12} -0.49^{+0.16}_{−0.17} 0.66^{+0.20}_{−0.20} 37.6 57 54.7±11.1 2.1±5.0 31.8±7.6 33.9±8.7 20.8±7.4 27.5±7.7 24.4±7.8 -0.12^{+0.18}_{−0.20} -0.81^{+0.37}_{−0.78} 0.19^{+0.18}_{−0.15} 37.4 58 17.0±9.7 7.0±5.4 11.4±5.9 18.3±7.5 -0.6±5.2 15.9±6.7 -0.1±5.6 -0.85^{+0.13}_{−0.15} -0.05^{+0.35}_{−0.46} 0.51^{+1.09}_{−0.39} 36.9 59 34.7±13.0 0.1±5.3 33.0±8.0 33.1±9.2 2.1±5.6 28.2±8.3 8.2±6.5 -0.64^{+0.12}_{−0.36} -1.21^{+0.70}_{−0.64} 0.86^{+0.87}_{−0.36} 37.2 60 48.9±10.0 18.1±6.1 21.3±6.5 39.4±8.5 9.5±6.0 27.3±7.2 14.6±6.6 -0.38^{+0.19}_{−0.22} -0.04^{+0.22}_{−0.12} 0.30^{+0.36}_{−0.23} 37.3 61 ≤16.5 - - - - - - - - - ≤36.9 62 25.9±7.0 17.9±5.7 8.3±4.4 26.2±6.7 -0.4±2.9 17.5±5.8 0.1±3.2 -0.96^{+0.07}_{−0.04} 0.40^{+0.22}_{−0.19} 0.84^{+0.92}_{−0.46} 37.0 63 142.9±14.4 25.0±7.0 76.6±10.3 101.5±12.0 41.4±8.6 93.5±11.4 47.4±9.1 -0.38^{+0.09}_{−0.09} -0.40^{+0.11}_{−0.13} 0.29^{+0.11}_{−0.09} 37.8 64 29.5±7.1 10.9±4.7 13.9±5.1 24.8±6.5 4.7±4.0 23.2±6.2 5.3±4.1 -0.69^{+0.17}_{−0.17} -0.02^{+0.19}_{−0.19} 0.46^{+0.34}_{−0.27} 37.1 65 103.3±11.9 26.0±6.6 56.8±8.9 82.7±10.6 20.5±6.2 69.0±9.8 28.9±7.0 -0.46^{+0.09}_{−0.10} -0.26^{+0.12}_{−0.10} 0.47^{+0.12}_{−0.12} 37.6 66 155.7±14.0 38.0±7.5 85.4±10.5 123.4±12.5 32.3±7.1 109.3±11.8 41.8±7.9 -0.49^{+0.07}_{−0.07} -0.26^{+0.08}_{−0.10} 0.45^{+0.09}_{−0.10} 37.8 67 139.1±14.2 6.8±5.1 82.8±10.6 89.6±11.4 49.4±9.1 73.2±10.3 64.0±10.1 -0.13^{+0.10}_{−0.09} -0.98^{+0.28}_{−0.32} 0.25^{+0.10}_{−0.08} 37.8 68 205.5±18.9 54.3±9.2 100.3±11.6 154.6±14.3 50.7±9.4 125.1±12.9 67.4±10.4 -0.35^{+0.06}_{−0.08} -0.18^{+0.08}_{−0.08} 0.33^{+0.08}_{−0.09} 37.9 69 78.7±11.5 14.8±5.9 46.7±8.5 61.6±9.9 17.1±6.6 49.6±8.8 25.1±7.5 -0.39^{+0.14}_{−0.13} -0.41^{+0.15}_{−0.17} 0.44^{+0.18}_{−0.15} 37.5 70 34.5±11.2 4.5±5.9 20.6±7.2 25.1±8.9 9.0±6.4 12.1±7.4 18.6±7.4 0.22^{+0.34}_{−0.39} -0.45^{+0.33}_{−0.68} 0.28^{+0.44}_{−0.28} 37.2 71 110.5±13.0 20.6±6.4 54.0±9.0 74.6±10.6 35.8±8.2 60.0±9.4 44.8±9.0 -0.20^{+0.11}_{−0.11} -0.32^{+0.11}_{−0.15} 0.15^{+0.15}_{−0.06} 37.7 72 244.3±17.7 66.3±9.6 118.4±12.3 184.7±15.2 59.6±9.6 160.8±14.1 73.1±10.5 -0.43^{+0.07}_{−0.06} -0.15^{+0.05}_{−0.09} 0.33^{+0.07}_{−0.08} 38.0 73 141.3±15.9 28.4±7.6 83.1±10.8 111.4±12.8 29.3±7.8 94.3±11.7 40.9±8.8 -0.45^{+0.09}_{−0.09} -0.37^{+0.10}_{−0.13} 0.48^{+0.12}_{−0.11} 37.8 74 77.0±10.4 20.6±6.0 37.0±7.4 57.6±9.0 19.4±6.0 48.9±8.3 21.7±6.3 -0.44^{+0.12}_{−0.11} -0.16^{+0.13}_{−0.13} 0.30^{+0.14}_{−0.12} 37.5 75 27.3±9.0 7.0±5.0 17.1±6.2 24.1±7.5 3.1±5.6 12.2±6.0 8.5±6.3 -0.30^{+0.39}_{−0.42} -0.27^{+0.28}_{−0.35} 0.59^{+0.71}_{−0.40} 37.1 76 268.2±24.0 67.0±10.2 144.9±13.7 211.9±16.6 56.1±9.7 181.2±15.3 76.8±10.9 -0.45^{+0.06}_{−0.06} -0.24^{+0.06}_{−0.08} 0.44^{+0.07}_{−0.08} 38.1 77 14.7±10.7 -4.1±4.1 13.8±6.2 9.7±7.0 5.8±6.0 12.3±6.6 6.2±6.3 -0.46^{+0.22}_{−0.54} -1.06^{+0.65}_{−0.87} 0.39^{+0.56}_{−0.44} 36.8 78 245.7±17.9 58.6±9.3 130.1±12.9 188.7±15.5 57.0±9.6 168.5±14.5 70.5±10.5 -0.46^{+0.06}_{−0.06} -0.25^{+0.06}_{−0.09} 0.39^{+0.06}_{−0.09} 38.0 79 ≤49.0 - - - - - - - - - ≤37.3 80 53.6±9.2 16.2±5.7 26.2±6.5 42.3±8.2 11.3±5.1 34.6±7.5 14.8±5.6 -0.45^{+0.14}_{−0.15} -0.14^{+0.17}_{−0.14} 0.38^{+0.19}_{−0.18} 37.4 81 71.9±11.1 18.7±6.6 27.7±7.1 46.4±9.2 25.5±6.8 39.0±8.5 28.9±7.2 -0.20^{+0.12}_{−0.15} -0.08^{+0.16}_{−0.16} 0.05^{+0.15}_{−0.13} 37.5 82 26.0±7.0 5.7±4.1 13.5±5.1 19.2±6.1 6.8±4.3 16.7±5.7 7.4±4.4 -0.45^{+0.21}_{−0.22} -0.27^{+0.24}_{−0.32} 0.29^{+0.27}_{−0.21} 37.0 83 240.9±23.0 70.6±10.3 129.1±13.0 199.7±16.2 40.3±8.7 171.1±14.9 62.1±10.1 -0.51^{+0.06}_{−0.07} -0.16^{+0.05}_{−0.09} 0.52^{+0.11}_{−0.07} 38.0 84 168.7±14.6 40.0±7.8 87.4±10.6 127.4±12.8 41.3±7.8 110.5±11.9 52.7±8.7 -0.40^{+0.06}_{−0.08} -0.25^{+0.08}_{−0.10} 0.36^{+0.08}_{−0.09} 37.9 85 154.0±14.1 32.4±7.3 89.7±10.8 122.1±12.6 31.9±7.1 107.8±11.9 41.1±7.9 -0.49^{+0.07}_{−0.08} -0.39^{+0.14}_{−0.05} 0.47^{+0.11}_{−0.08} 37.8 86 54.5±9.5 10.5±5.2 36.4±7.5 46.9±8.7 7.7±4.6 37.0±7.9 14.2±5.4 -0.49^{+0.12}_{−0.15} -0.47^{+0.20}_{−0.19} 0.70^{+0.22}_{−0.23} 37.4 87 59.8±8.4 2.5±4.4 31.4±7.4 33.9±8.2 26.3±7.6 31.7±7.6 29.3±8.0 -0.10^{+0.15}_{−0.16} -0.86^{+0.42}_{−0.67} 0.07^{+0.17}_{−0.11} 37.4 88 76.5±11.6 19.7±6.8 44.8±8.4 64.5±10.4 11.9±5.6 52.8±9.6 18.0±6.3 -0.54^{+0.12}_{−0.12} -0.29^{+0.17}_{−0.13} 0.59^{+0.19}_{−0.18} 37.5 89 ≤6.4 - - - - - - - - - ≤36.4 90 22.9±8.8 6.0±5.1 13.5±6.0 19.5±7.4 3.3±5.4 17.6±6.6 5.7±6.0 -0.63^{+0.16}_{−0.37} -0.23^{+0.38}_{−0.43} 0.48^{+0.74}_{−0.44} 37.0 91 93.1±12.4 41.8±8.5 42.7±8.5 84.5±11.6 8.6±5.2 70.7±10.6 12.3±5.8 -0.74^{+0.11}_{−0.09} 0.07^{+0.10}_{−0.12} 0.63^{+0.34}_{−0.16} 37.6 92 25.5±6.9 1.0±3.2 16.5±5.4 17.4±5.9 8.0±4.4 14.9±5.4 10.7±4.8 -0.22^{+0.20}_{−0.23} -0.84^{+0.38}_{−0.76} 0.32^{+0.22}_{−0.21} 37.0 93 25.6±9.5 11.7±6.0 8.1±5.6 19.8±7.7 5.8±6.1 13.7±6.6 8.9±6.6 -0.32^{+0.37}_{−0.44} 0.21^{+0.44}_{−0.34} 0.21^{+0.62}_{−0.55} 37.0 94 35.9±5.0 1.1±3.6 19.1±6.0 20.2±6.5 15.3±6.1 19.5±6.2 17.2±6.4 -0.13^{+0.21}_{−0.20} -0.88^{+0.50}_{−0.74} 0.08^{+0.23}_{−0.14} 37.2

TABLE 4 — Continued

MID Net Counts HR C21 C32 Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12)

95 11.9±7.9 -1.9±3.8 7.7±5.3 5.8±6.1 6.2±5.7 4.9±5.3 8.6±6.2 0.24^{+0.76}_{−0.28} -0.79^{+0.79}_{−0.86} 0.05^{+0.62}_{−0.45} 36.7 96 859.2±31.2 179.4±15.0 497.0±23.6 676.3±27.6 182.9±15.2 573.6±25.4 250.3±17.5 -0.44^{+0.03}_{−0.03} -0.37^{+0.05}_{−0.03} 0.46^{+0.04}_{−0.04} 38.6 97 43.9±9.8 8.1±5.1 20.9±6.5 29.0±7.8 14.9±6.5 23.9±7.0 18.6±7.1 -0.20^{+0.20}_{−0.21} -0.32^{+0.25}_{−0.28} 0.16^{+0.22}_{−0.20} 37.3 98 306.4±19.8 56.3±9.7 180.8±15.0 237.1±17.5 69.3±9.9 200.5±16.1 97.6±11.5 -0.40^{+0.06}_{−0.05} -0.42^{+0.07}_{−0.09} 0.44^{+0.07}_{−0.06} 38.1 99 256.7±20.2 75.6±12.1 129.5±13.8 205.2±17.9 51.5±9.4 177.2±16.6 64.6±10.3 -0.51^{+0.06}_{−0.07} -0.16^{+0.08}_{−0.08} 0.41^{+0.10}_{−0.07} 38.0 100 118.8±16.4 35.0±8.8 60.3±9.9 95.3±12.8 24.3±7.9 72.1±11.4 36.6±8.9 -0.38^{+0.10}_{−0.13} -0.17^{+0.14}_{−0.10} 0.40^{+0.17}_{−0.12} 37.7 101 175.3±17.7 44.1±10.5 89.6±12.1 133.7±15.6 41.6±8.4 94.8±13.7 53.4±9.4 -0.33^{+0.08}_{−0.10} -0.22^{+0.10}_{−0.12} 0.37^{+0.08}_{−0.11} 37.9 102 26.5±13.6 17.4±8.0 10.0±7.1 27.4±10.3 -0.5±5.8 21.5±9.3 1.8±6.3 -0.80^{+0.14}_{−0.20} 0.36^{+0.44}_{−0.45} 0.57^{+1.01}_{−0.74} 37.1 103 175.2±15.9 34.2±7.8 88.4±11.1 122.6±13.2 52.6±9.5 105.9±12.1 60.3±10.0 -0.33^{+0.08}_{−0.09} -0.33^{+0.09}_{−0.11} 0.25^{+0.08}_{−0.09} 37.9 104 134.2±15.5 36.7±9.4 69.7±10.7 106.4±13.8 27.8±7.3 90.2±12.8 40.0±8.4 -0.44^{+0.08}_{−0.10} -0.18^{+0.11}_{−0.13} 0.42^{+0.12}_{−0.11} 37.8 105 ≤100.3 - - - - - - - - - ≤37.6 106 139.1±17.5 45.7±11.2 77.7±12.2 123.3±16.2 15.8±6.6 111.1±15.3 22.8±7.4 -0.70^{+0.09}_{−0.07} -0.15^{+0.13}_{−0.12} 0.73^{+0.15}_{−0.20} 37.8 107 46.6±9.8 8.2±5.0 32.2±7.4 40.4±8.5 6.1±5.7 36.4±7.8 10.4±6.3 -0.63^{+0.21}_{−0.17} -0.49^{+0.22}_{−0.26} 0.73^{+0.43}_{−0.36} 37.3 108 133.5±14.2 26.8±7.1 82.9±10.7 109.7±12.4 23.8±7.5 99.3±11.7 32.5±8.3 -0.55^{+0.08}_{−0.09} -0.40^{+0.10}_{−0.13} 0.57^{+0.13}_{−0.14} 37.8 109 73.4±16.3 19.1±8.8 47.2±9.9 66.3±12.8 7.5±6.9 58.0±11.8 12.6±7.6 -0.72^{+0.17}_{−0.18} -0.26^{+0.19}_{−0.29} 0.77^{+0.53}_{−0.36} 37.5 110 81.9±15.8 23.6±7.8 52.3±9.8 76.0±12.1 6.1±6.7 65.0±11.1 12.8±7.5 -0.74^{+0.14}_{−0.16} -0.28^{+0.17}_{−0.13} 0.86^{+0.56}_{−0.33} 37.5 111 81.4±12.9 29.5±8.0 51.0±9.2 80.5±11.8 0.8±5.5 70.7±10.9 6.3±6.3 -0.89^{+0.06}_{−0.11} -0.18^{+0.15}_{−0.11} 1.38^{+0.68}_{−0.60} 37.5 112 8.2±8.6 3.7±4.4 0.3±4.3 4.0±5.7 4.4±5.7 3.6±5.0 4.3±5.9 0.03^{+0.97}_{−0.38} 0.22^{+1.13}_{−0.70} -0.38^{+0.94}_{−0.96} 36.5 113 13.4±8.8 8.7±5.7 7.2±5.6 15.9±7.5 -2.4±5.1 10.0±6.4 -1.6±5.5 -0.78^{+0.20}_{−0.22} 0.06^{+0.66}_{−0.34} 0.58^{+1.03}_{−0.60} 36.8 114 192.6±17.1 59.7±10.4 99.0±11.9 158.7±15.4 33.9±7.6 145.3±14.7 43.5±8.4 -0.58^{+0.05}_{−0.08} -0.15^{+0.10}_{−0.07} 0.48^{+0.11}_{−0.09} 37.9 115 30.7±10.3 5.3±5.9 20.8±7.1 26.1±8.7 4.6±6.0 24.3±8.1 7.1±6.5 -0.66^{+0.14}_{−0.34} -0.36^{+0.27}_{−0.64} 0.45^{+0.70}_{−0.27} 37.1 116 89.0±13.5 11.4±7.5 59.7±10.0 71.1±12.0 17.9±6.3 64.9±11.4 23.7±6.9 -0.51^{+0.11}_{−0.12} -0.59^{+0.28}_{−0.36} 0.56^{+0.14}_{−0.15} 37.6 117 48772.2±222.9 17109.1±132.5 25053.1±159.7 42162.2±207.1 6609.9±82.7 36065.3±191.6 9428.6±98.5 -0.62^{+0.00}_{−0.01} -0.09^{+0.01}_{−0.00} 0.60^{+0.01}_{−0.00} 40.3 118 372.0±21.6 76.8±10.8 215.4±16.2 292.2±19.0 79.8±10.7 246.2±17.5 105.6±12.0 -0.45^{+0.05}_{−0.05} -0.36^{+0.06}_{−0.07} 0.46^{+0.06}_{−0.06} 38.2 119 1275.8±41.5 232.4±20.6 703.1±29.8 935.4±35.8 340.4±20.3 802.5±33.3 444.2±23.0 -0.34^{+0.03}_{−0.03} -0.40^{+0.04}_{−0.05} 0.35^{+0.02}_{−0.04} 38.7 120 621.0±33.5 159.6±19.3 343.6±23.3 503.1±29.8 117.9±13.6 438.5±27.9 160.4±15.6 -0.51^{+0.04}_{−0.04} -0.25^{+0.05}_{−0.07} 0.49^{+0.06}_{−0.06} 38.4 121 55.0±11.9 17.0±6.1 27.5±7.1 44.5±8.9 10.6±6.4 43.5±8.5 12.6±6.7 -0.62^{+0.18}_{−0.17} -0.15^{+0.18}_{−0.15} 0.40^{+0.33}_{−0.23} 37.4 122 20.8±8.4 9.6±5.2 14.7±5.8 24.3±7.3 -3.6±4.8 22.7±6.7 -1.2±5.3 -0.91^{+0.08}_{−0.09} -0.09^{+0.23}_{−0.26} 0.93^{+0.97}_{−0.49} 37.0 123 ≤240.4 - - - - - - - - - ≤38.0 124 164.1±17.1 53.8±10.6 101.9±12.5 155.6±15.9 8.5±6.0 143.2±15.2 16.4±6.9 -0.82^{+0.06}_{−0.06} -0.20^{+0.08}_{−0.10} 1.00^{+0.43}_{−0.20} 37.8 125 101.4±14.2 18.8±6.7 57.1±9.5 76.0±11.2 25.6±7.8 61.1±10.1 37.9±8.7 -0.29^{+0.10}_{−0.13} -0.37^{+0.11}_{−0.19} 0.40^{+0.11}_{−0.17} 37.6 126 69.4±14.0 25.5±7.9 27.7±7.8 53.2±10.6 16.2±6.9 40.3±9.4 20.2±7.5 -0.40^{+0.18}_{−0.16} 0.09^{+0.12}_{−0.21} 0.23^{+0.25}_{−0.16} 37.5 127 72.7±11.1 25.2±7.1 40.0±8.1 65.2±10.3 7.5±4.7 55.2±9.5 14.0±5.7 -0.64^{+0.11}_{−0.11} -0.13^{+0.15}_{−0.11} 0.71^{+0.28}_{−0.21} 37.5 128 120.6±16.0 62.1±11.3 39.8±9.8 102.0±14.5 18.6±6.6 95.2±13.8 22.1±7.1 -0.66^{+0.09}_{−0.09} 0.26^{+0.13}_{−0.12} 0.29^{+0.22}_{−0.11} 37.7 129 114.4±13.8 44.7±9.0 56.3±9.6 101.0±12.7 13.4±5.7 99.7±12.3 11.3±5.8 -0.83^{+0.08}_{−0.08} 0.01^{+0.07}_{−0.13} 0.70^{+0.11}_{−0.24} 37.7 130 65.1±12.0 11.2±6.4 38.1±8.4 49.2±10.1 15.9±6.9 47.0±9.5 16.9±7.2 -0.53^{+0.15}_{−0.17} -0.48^{+0.27}_{−0.24} 0.41^{+0.20}_{−0.20} 37.4 131 30.7±7.6 15.6±5.6 11.5±5.0 27.1±7.0 3.6±3.8 23.9±6.5 4.0±4.0 -0.79^{+0.12}_{−0.14} 0.20^{+0.20}_{−0.19} 0.46^{+0.48}_{−0.33} 37.1 132 264.8±23.4 85.3±14.4 122.9±15.6 208.2±20.7 56.6±9.8 179.8±19.5 76.0±11.0 -0.45^{+0.06}_{−0.07} -0.07^{+0.06}_{−0.11} 0.35^{+0.10}_{−0.07} 38.0 133 311.9±19.7 65.8±9.6 165.7±14.3 231.5±16.8 80.4±10.9 207.4±15.8 101.1±12.0 -0.40^{+0.06}_{−0.05} -0.32^{+0.07}_{−0.07} 0.34^{+0.07}_{−0.06} 38.1 134 64.2±9.8 19.8±5.9 29.3±6.8 49.1±8.5 15.1±5.6 44.0±8.1 17.5±5.9 -0.48^{+0.12}_{−0.13} -0.09^{+0.13}_{−0.15} 0.30^{+0.17}_{−0.14} 37.4 135 113.6±13.7 36.2±8.5 57.1±9.5 93.3±12.3 20.3±6.4 83.8±11.6 28.2±7.2 -0.54^{+0.09}_{−0.09} -0.16^{+0.15}_{−0.07} 0.46^{+0.14}_{−0.12} 37.7 136 ≤30.6 - - - - - - - - - ≤37.1 137 96.6±12.0 19.6±6.4 67.0±9.8 86.6±11.2 10.0±4.9 77.0±10.6 17.6±5.9 -0.66^{+0.07}_{−0.10} -0.44^{+0.12}_{−0.15} 0.83^{+0.19}_{−0.16} 37.6 138 79.5±12.6 19.9±7.4 41.7±8.9 61.6±11.2 17.9±6.1 49.7±10.3 22.9±6.7 -0.42^{+0.13}_{−0.13} -0.26^{+0.19}_{−0.16} 0.38^{+0.17}_{−0.14} 37.5 139 161.6±14.8 45.9±8.5 102.3±11.6 148.2±14.0 13.3±5.3 136.2±13.4 22.8±6.5 -0.74^{+0.05}_{−0.06} -0.26^{+0.07}_{−0.09} 0.88^{+0.18}_{−0.11} 37.8 140 296.5±19.1 71.4±10.0 156.1±13.9 227.5±16.7 69.0±9.9 200.6±15.7 84.3±10.8 -0.46^{+0.05}_{−0.06} -0.26^{+0.07}_{−0.06} 0.39^{+0.06}_{−0.07} 38.1 141 98.1±14.6 24.4±7.2 67.1±9.9 91.5±11.9 6.3±6.0 84.0±11.1 15.0±7.0 -0.74^{+0.10}_{−0.11} -0.35^{+0.12}_{−0.14} 1.05^{+0.43}_{−0.36} 37.6

TABLE 4 — Continued

MID Net Counts HR C21 C32 Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12)

142 48.7±10.1 8.8±5.1 28.0±7.1 36.7±8.3 12.0±6.3 36.8±7.9 10.7±6.4 -0.62^{+0.20}_{−0.18} -0.43^{+0.25}_{−0.22} 0.37^{+0.27}_{−0.21} 37.3 143 98.7±12.5 0.2±3.8 44.9±8.3 45.1±8.8 53.6±9.4 34.2±7.7 64.8±10.2 0.26^{+0.11}_{−0.12} -1.31^{+0.50}_{−0.79} -0.06^{+0.11}_{−0.09} 37.6 144 40.4±11.2 18.3±6.6 18.8±6.6 37.2±8.9 3.2±5.7 32.2±8.1 8.9±6.5 -0.66^{+0.22}_{−0.22} 0.05^{+0.21}_{−0.17} 0.63^{+0.71}_{−0.39} 37.2 145 55.0±14.7 36.9±10.0 21.2±7.9 58.1±12.3 -3.1±5.4 47.1±11.1 -2.1±6.0 -0.95^{+0.05}_{−0.05} 0.35^{+0.15}_{−0.23} 0.91^{+1.07}_{−0.40} 37.4 146 1120.3±35.7 225.1±17.1 642.6±26.9 867.7±31.5 252.6±17.4 763.7±29.6 341.3±19.9 -0.43^{+0.03}_{−0.03} -0.38^{+0.04}_{−0.03} 0.43^{+0.03}_{−0.03} 38.7 147 391.9±22.8 119.0±13.3 217.5±16.6 336.5±20.9 55.4±9.4 302.2±19.8 79.2±10.8 -0.62^{+0.04}_{−0.04} -0.18^{+0.05}_{−0.06} 0.61^{+0.08}_{−0.06} 38.2 148 295.1±18.8 68.5±9.6 154.2±13.7 222.7±16.4 72.5±10.0 190.7±15.2 94.2±11.2 -0.39^{+0.05}_{−0.06} -0.26^{+0.05}_{−0.08} 0.36^{+0.06}_{−0.07} 38.1 149 ≤119.2 - - - - - - - - - ≤37.7 150 32.7±7.5 5.5±4.0 16.7±5.4 22.2±6.3 10.5±4.8 21.6±6.1 11.1±5.0 -0.38^{+0.19}_{−0.17} -0.38^{+0.25}_{−0.26} 0.22^{+0.19}_{−0.19} 37.1 151 23.0±8.7 5.3±4.7 21.1±6.6 26.5±7.7 -3.5±4.7 22.0±6.9 1.4±5.6 -0.87^{+0.10}_{−0.13} -0.46^{+0.30}_{−0.43} 1.15^{+0.84}_{−0.54} 37.0 152 28.9±7.1 19.0±5.7 5.6±4.0 24.6±6.5 4.3±3.8 21.6±6.1 4.0±3.8 -0.75^{+0.14}_{−0.17} 0.56^{+0.27}_{−0.21} 0.13^{+0.41}_{−0.37} 37.1 153 39.6±12.7 6.9±7.2 23.6±8.5 30.5±10.7 9.1±6.4 24.6±9.8 10.7±6.9 -0.47^{+0.31}_{−0.32} -0.38^{+0.39}_{−0.61} 0.41^{+0.40}_{−0.37} 37.2 154 247.9±18.3 57.2±9.7 126.0±13.0 183.2±15.8 64.7±9.7 157.4±14.7 84.6±10.8 -0.35^{+0.06}_{−0.07} -0.26^{+0.08}_{−0.07} 0.31^{+0.08}_{−0.06} 38.0 155 138.5±14.3 42.1±8.3 67.7±9.9 109.8±12.5 28.7±7.7 94.7±11.5 34.8±8.3 -0.51^{+0.08}_{−0.10} -0.13^{+0.10}_{−0.09} 0.38^{+0.14}_{−0.10} 37.8 156 52.4±13.3 16.0±6.4 36.8±8.3 52.8±10.0 -0.4±5.3 41.8±8.9 6.1±6.3 -0.80^{+0.08}_{−0.20} -0.30^{+0.19}_{−0.16} 1.30^{+0.74}_{−0.63} 37.3 157 287.7±21.6 59.9±9.8 174.4±14.9 234.3±17.4 53.8±9.7 204.7±16.2 68.8±10.7 -0.54^{+0.06}_{−0.06} -0.38^{+0.07}_{−0.08} 0.54^{+0.08}_{−0.08} 38.1 158 1181.3±44.8 247.3±17.4 704.3±27.9 951.5±32.5 229.6±16.8 810.4±30.0 323.6±19.6 -0.48^{+0.03}_{−0.02} -0.39^{+0.05}_{−0.02} 0.52^{+0.03}_{−0.04} 38.7 159 34.3±7.8 5.2±4.0 15.6±5.4 20.8±6.3 13.5±5.3 16.4±5.7 15.9±5.7 -0.07^{+0.19}_{−0.21} -0.43^{+0.32}_{−0.24} 0.09^{+0.18}_{−0.19} 37.2 160 103.2±13.3 20.5±6.8 56.6±9.4 77.1±11.2 26.1±7.7 65.2±10.2 33.0±8.4 -0.38^{+0.11}_{−0.12} -0.36^{+0.13}_{−0.15} 0.35^{+0.14}_{−0.13} 37.6 161 23.7±10.3 9.9±5.8 16.2±6.4 26.1±8.1 -1.4±5.2 15.4±6.7 3.0±6.0 -0.74^{+0.16}_{−0.26} -0.16^{+0.31}_{−0.27} 0.78^{+0.91}_{−0.48} 37.0 162 105.3±13.7 37.4±8.4 53.1±9.4 90.5±12.2 14.8±6.8 74.4±11.1 17.4±7.2 -0.67^{+0.12}_{−0.10} -0.09^{+0.13}_{−0.09} 0.62^{+0.17}_{−0.23} 37.6 163 583.0±32.7 112.9±12.6 328.7±19.6 441.6±22.9 142.2±13.8 366.2±20.9 196.6±15.8 -0.35^{+0.03}_{−0.05} -0.39^{+0.06}_{−0.05} 0.39^{+0.05}_{−0.05} 38.4 164 48.2±10.3 12.0±5.6 28.1±7.3 40.1±8.7 8.1±6.1 36.7±8.1 9.8±6.5 -0.66^{+0.21}_{−0.19} -0.31^{+0.21}_{−0.18} 0.42^{+0.49}_{−0.18} 37.3 165 62.3±9.6 27.4±6.5 31.4±7.0 58.8±9.1 3.5±4.0 50.5±8.5 5.8±4.4 -0.84^{+0.10}_{−0.10} 0.01^{+0.13}_{−0.11} 0.85^{+0.53}_{−0.28} 37.4 166 101.3±13.4 31.6±7.7 44.6±8.8 76.2±11.2 25.1±7.8 67.6±10.4 25.5±8.1 -0.50^{+0.11}_{−0.13} -0.09^{+0.14}_{−0.09} 0.25^{+0.17}_{−0.12} 37.6 167 39.6±8.1 13.0±5.1 15.9±5.4 28.9±7.0 10.6±5.0 27.8±6.7 11.0±5.1 -0.49^{+0.16}_{−0.16} -0.01^{+0.18}_{−0.18} 0.19^{+0.20}_{−0.20} 37.2 168 41.0±8.2 7.6±4.3 24.6±6.4 32.2±7.2 8.8±4.7 28.8±6.8 13.0±5.3 -0.43^{+0.14}_{−0.17} -0.40^{+0.19}_{−0.22} 0.46^{+0.21}_{−0.19} 37.2 169 140.6±14.4 55.8±9.0 77.9±10.5 133.7±13.4 6.9±6.1 118.8±12.5 13.5±6.9 -0.83^{+0.07}_{−0.08} -0.05^{+0.07}_{−0.09} 0.99^{+0.48}_{−0.27} 37.8 170 109.3±13.2 28.0±7.1 56.4±9.3 84.4±11.3 25.0±7.5 76.8±10.6 26.5±7.8 -0.54^{+0.11}_{−0.10} -0.22^{+0.11}_{−0.12} 0.35^{+0.17}_{−0.10} 37.7 171 62.5±11.0 21.9±6.5 35.2±7.8 57.1±9.8 5.4±5.8 50.5±9.0 7.9±6.3 -0.79^{+0.07}_{−0.21} -0.13^{+0.15}_{−0.13} 0.79^{+0.50}_{−0.37} 37.4 172 35.3±10.7 13.1±6.0 10.1±5.8 23.2±7.8 11.7±6.4 21.7±7.2 9.2±6.4 -0.51^{+0.28}_{−0.30} 0.16^{+0.34}_{−0.28} -0.05^{+0.38}_{−0.36} 37.2 173 ≤13.6 - - - - - - - - - ≤36.8 174 32.8±12.5 8.3±5.5 30.9±7.7 39.2±9.0 -6.2±4.4 35.6±8.3 -3.5±5.1 -0.96^{+0.04}_{−0.04} -0.49^{+0.29}_{−0.29} 1.49^{+0.90}_{−0.57} 37.1 175 34.4±12.1 13.0±6.0 15.4±6.6 28.3±8.4 6.5±6.0 23.7±7.5 9.1±6.6 -0.55^{+0.26}_{−0.29} 0.02^{+0.23}_{−0.26} 0.25^{+0.65}_{−0.30} 37.2 176 16.0±8.2 3.8±4.4 8.8±5.3 12.6±6.5 3.4±5.6 7.1±5.3 8.3±6.3 -0.04^{+0.58}_{−0.50} -0.20^{+0.47}_{−0.65} 0.23^{+0.84}_{−0.43} 36.8 177 ≤21.3 - - - - - - - - - ≤37.0 178 29.2±10.1 17.3±6.7 7.7±5.9 25.0±8.5 4.2±5.9 17.4±7.5 6.0±6.3 -0.60^{+0.17}_{−0.40} 0.37^{+0.46}_{−0.30} 0.24^{+0.69}_{−0.72} 37.1 179 113.5±12.3 26.6±6.5 61.6±9.2 88.1±10.8 25.3±6.6 67.3±9.6 39.5±7.8 -0.31^{+0.09}_{−0.10} -0.30^{+0.13}_{−0.09} 0.41^{+0.11}_{−0.11} 37.7 180 31.2±11.9 13.3±6.4 13.9±6.4 27.2±8.5 4.0±5.9 22.0±7.7 10.9±6.7 -0.44^{+0.30}_{−0.29} 0.04^{+0.29}_{−0.26} 0.40^{+0.67}_{−0.44} 37.1 181 64.2±12.6 6.8±5.3 44.8±8.5 51.6±9.7 12.1±6.4 47.1±9.0 15.1±6.8 -0.57^{+0.15}_{−0.16} -0.69^{+0.31}_{−0.34} 0.59^{+0.23}_{−0.24} 37.4 182 56.8±9.3 11.5±5.0 32.9±7.1 44.4±8.2 12.4±5.2 36.1±7.5 16.9±5.8 -0.42^{+0.13}_{−0.14} -0.34^{+0.13}_{−0.20} 0.45^{+0.17}_{−0.16} 37.4 183 64.9±11.0 10.0±5.4 34.2±7.6 44.2±8.9 20.6±7.1 35.6±7.9 24.4±7.5 -0.25^{+0.15}_{−0.16} -0.44^{+0.22}_{−0.23} 0.22^{+0.18}_{−0.13} 37.4 184 1109.6±34.9 196.3±15.4 626.3±26.3 822.7±30.1 286.9±18.5 702.5±27.8 377.6±20.9 -0.35^{+0.02}_{−0.03} -0.43^{+0.04}_{−0.03} 0.37^{+0.03}_{−0.03} 38.7 185 538.6±29.1 86.0±11.0 325.0±19.4 411.0±21.9 128.0±13.2 350.7±20.3 174.8±15.1 -0.39^{+0.05}_{−0.04} -0.49^{+0.05}_{−0.06} 0.43^{+0.05}_{−0.05} 38.4 186 46.3±10.6 12.9±6.1 24.9±7.2 37.8±9.0 8.5±6.2 29.0±8.0 11.2±6.6 -0.53^{+0.26}_{−0.22} -0.20^{+0.21}_{−0.22} 0.50^{+0.36}_{−0.33} 37.3 187 143.7±14.8 33.4±7.8 80.4±10.7 113.7±12.8 30.0±8.0 101.5±11.9 39.6±8.8 -0.49^{+0.09}_{−0.08} -0.29^{+0.10}_{−0.10} 0.43^{+0.14}_{−0.09} 37.8 188 13.0±8.3 5.3±4.8 7.8±5.5 13.1±6.8 -0.1±5.2 13.9±6.3 -0.5±5.5 -0.84^{+0.14}_{−0.16} -0.05^{+0.51}_{−0.59} 0.27^{+1.24}_{−0.34} 36.7

TABLE 4 — Continued

MID Net Counts HR C21 C32 Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12)

189 136.2±15.6 32.0±7.8 77.9±10.5 109.9±12.6 26.0±7.5 95.6±11.7 35.0±8.3 -0.51^{+0.09}_{−0.09} -0.30^{+0.09}_{−0.12} 0.49^{+0.15}_{−0.11} 37.8 190 139.3±14.4 27.3±7.1 90.4±11.1 117.7±12.7 21.6±7.3 97.4±11.6 37.2±8.6 -0.50^{+0.09}_{−0.08} -0.42^{+0.08}_{−0.13} 0.60^{+0.19}_{−0.09} 37.8 191 103.3±13.1 27.7±7.3 50.2±8.9 77.9±11.0 25.4±7.5 64.5±10.0 29.9±8.0 -0.42^{+0.11}_{−0.12} -0.19^{+0.13}_{−0.11} 0.28^{+0.19}_{−0.09} 37.6 192 32.8±9.5 5.8±5.0 17.3±6.5 23.1±7.7 9.7±6.2 22.0±7.1 11.1±6.6 -0.42^{+0.31}_{−0.24} -0.35^{+0.33}_{−0.44} 0.26^{+0.33}_{−0.32} 37.1 193 28.2±9.4 8.2±5.5 11.6±5.8 19.8±7.5 8.4±6.2 14.7±6.6 11.5±6.6 -0.22^{+0.42}_{−0.29} -0.12^{+0.37}_{−0.35} 0.10^{+0.50}_{−0.33} 37.1 194 598.4±28.4 138.4±13.3 333.6±19.5 472.0±23.2 126.7±13.0 404.4±21.5 170.5±14.8 -0.46^{+0.04}_{−0.04} -0.32^{+0.06}_{−0.03} 0.45^{+0.05}_{−0.05} 38.4 195 117.5±13.5 28.7±7.1 70.4±10.0 99.1±11.8 18.4±7.1 78.9±10.5 32.2±8.3 -0.47^{+0.10}_{−0.10} -0.30^{+0.10}_{−0.11} 0.58^{+0.20}_{−0.13} 37.7 196 41.9±9.5 19.5±6.3 20.2±6.3 39.7±8.4 2.2±5.2 30.4±7.4 8.6±6.1 -0.64^{+0.23}_{−0.20} 0.00^{+0.22}_{−0.11} 0.77^{+0.75}_{−0.44} 37.3 197 58.5±10.8 9.8±5.6 36.1±7.8 46.0±9.2 12.5±6.4 29.6±7.7 25.3±7.6 -0.14^{+0.17}_{−0.18} -0.47^{+0.23}_{−0.25} 0.49^{+0.24}_{−0.22} 37.4 198 15.5±8.2 0.1±4.0 9.4±5.3 9.5±6.2 6.0±5.9 6.9±5.3 8.5±6.3 0.02^{+0.52}_{−0.57} -0.58^{+0.52}_{−0.93} 0.21^{+0.52}_{−0.50} 36.8 199 34.5±9.5 10.1±5.6 14.3±6.0 24.4±7.7 10.2±6.2 21.0±7.0 15.0±6.8 -0.23^{+0.23}_{−0.26} -0.10^{+0.30}_{−0.25} 0.14^{+0.35}_{−0.28} 37.2 200 15.3±8.2 6.2±5.0 2.5±4.4 8.8±6.2 6.6±5.9 9.1±5.6 5.3±6.0 -0.40^{+0.24}_{−0.60} 0.31^{+0.85}_{−0.61} -0.18^{+0.63}_{−0.94} 36.8 201 42.3±9.8 2.5±4.4 12.9±5.7 15.4±6.7 26.9±7.6 8.0±5.6 32.3±8.1 0.59^{+0.24}_{−0.21} -0.68^{+0.65}_{−0.51} -0.31^{+0.23}_{−0.16} 37.3 202 91.8±12.2 12.6±5.6 59.1±9.2 71.7±10.4 20.2±7.1 65.0±9.7 26.3±7.8 -0.48^{+0.12}_{−0.11} -0.61^{+0.18}_{−0.16} 0.49^{+0.14}_{−0.16} 37.6 203 72.1±11.3 18.5±6.2 42.2±8.1 60.7±9.8 11.4±6.3 53.6±9.0 14.5±6.7 -0.63^{+0.14}_{−0.13} -0.27^{+0.14}_{−0.15} 0.57^{+0.27}_{−0.21} 37.5 204 336.2±20.3 101.1±11.6 191.4±15.2 292.4±18.7 43.8±8.7 251.0±17.3 67.0±10.2 -0.62^{+0.05}_{−0.04} -0.22^{+0.08}_{−0.03} 0.66^{+0.09}_{−0.08} 38.2 205 77.2±11.7 12.0±5.6 53.0±9.0 65.0±10.2 12.2±6.5 60.4±9.5 14.7±6.9 -0.66^{+0.13}_{−0.13} -0.56^{+0.17}_{−0.19} 0.68^{+0.21}_{−0.25} 37.5 206 31.4±9.3 8.0±5.1 15.7±6.2 23.7±7.5 7.7±6.0 23.4±7.0 8.1±6.3 -0.59^{+0.24}_{−0.29} -0.21^{+0.27}_{−0.32} 0.38^{+0.36}_{−0.42} 37.1 207 12.9±8.1 4.8±4.7 13.3±5.9 18.1±7.1 -5.2±4.6 15.6±6.4 -5.6±4.8 -0.96^{+0.07}_{−0.04} -0.29^{+0.34}_{−0.54} 0.99^{+0.92}_{−0.53} 36.7 208 45.6±10.0 5.5±4.7 33.4±7.5 38.8±8.5 6.8±6.0 30.4±7.5 12.5±6.7 -0.50^{+0.23}_{−0.21} -0.62^{+0.25}_{−0.43} 0.65^{+0.43}_{−0.34} 37.3 209 196.9±16.2 10.1±5.3 110.1±11.9 120.2±12.7 76.6±10.7 96.1±11.4 99.5±11.9 -0.04^{+0.07}_{−0.09} -0.91^{+0.16}_{−0.24} 0.18^{+0.08}_{−0.06} 37.9 210 50.2±8.7 14.0±5.1 24.5±6.3 38.5±7.6 11.7±5.1 35.3±7.2 15.0±5.6 -0.45^{+0.13}_{−0.14} -0.15^{+0.15}_{−0.16} 0.33^{+0.18}_{−0.18} 37.3 211 57.1±10.6 10.9±5.4 32.7±7.5 43.6±8.9 13.5±6.5 38.3±8.1 15.9±6.9 -0.48^{+0.17}_{−0.18} -0.40^{+0.19}_{−0.22} 0.44^{+0.20}_{−0.23} 37.4 212 22.3±9.6 7.0±4.8 13.6±5.9 20.5±7.1 1.6±5.2 19.5±6.5 2.1±5.6 -0.83^{+0.12}_{−0.17} -0.21^{+0.33}_{−0.32} 0.59^{+0.87}_{−0.44} 37.0 213 89.3±12.9 22.7±6.5 28.1±7.1 50.8±9.2 38.4±8.5 49.0±8.7 38.8±8.7 -0.18^{+0.13}_{−0.12} -0.04^{+0.17}_{−0.12} -0.12^{+0.14}_{−0.12} 37.6 214 18.5±6.0 4.7±3.6 6.5±4.0 11.2±4.8 7.2±4.3 12.5±4.8 6.7±4.3 -0.37^{+0.24}_{−0.25} -0.05^{+0.29}_{−0.30} -0.03^{+0.27}_{−0.26} 36.9 215 25.1±8.7 2.2±4.3 18.1±6.2 20.3±7.1 4.8±5.7 19.9±6.5 5.3±6.0 -0.67^{+0.13}_{−0.33} -0.63^{+0.42}_{−0.71} 0.44^{+0.64}_{−0.31} 37.0 216 102.3±12.9 21.3±6.5 64.2±9.6 85.5±11.2 16.8±7.0 79.2±10.6 21.8±7.5 -0.61^{+0.11}_{−0.10} -0.38^{+0.12}_{−0.13} 0.56^{+0.23}_{−0.12} 37.6 217 46.4±10.6 9.3±5.2 35.5±7.7 44.8±8.9 2.2±5.3 39.8±8.1 5.8±6.0 -0.81^{+0.08}_{−0.19} -0.51^{+0.22}_{−0.23} 0.97^{+0.78}_{−0.38} 37.3 218 22.8±9.3 3.8±4.4 13.9±5.8 17.7±6.8 5.3±5.6 17.2±6.2 6.8±6.0 -0.56^{+0.15}_{−0.44} -0.47^{+0.46}_{−0.49} 0.39^{+0.52}_{−0.42} 37.0 219 29.5±9.3 6.8±5.1 15.8±6.2 22.6±7.5 6.9±6.1 20.4±6.8 8.2±6.5 -0.55^{+0.15}_{−0.45} -0.26^{+0.32}_{−0.40} 0.28^{+0.54}_{−0.29} 37.1 220 340.2±20.3 96.3±11.2 181.4±14.8 277.7±18.1 62.5±9.8 245.8±17.0 78.5±10.8 -0.56^{+0.05}_{−0.05} -0.21^{+0.07}_{−0.04} 0.49^{+0.06}_{−0.08} 38.2 221 ≤9.1 - - - - - - - - - ≤36.6 222 ≤5.2 - - - - - - - - - ≤36.5 223 79.2±11.5 11.9±5.4 40.8±8.1 52.7±9.3 26.5±7.5 49.4±8.7 29.2±7.8 -0.32^{+0.14}_{−0.12} -0.47^{+0.19}_{−0.17} 0.20^{+0.15}_{−0.11} 37.5 224 ≤27.6 - - - - - - - - - ≤37.1 225 188.2±16.0 47.6±8.6 101.5±11.6 149.0±14.0 39.2±8.5 131.9±13.1 49.3±9.3 -0.50^{+0.07}_{−0.08} -0.24^{+0.08}_{−0.09} 0.43^{+0.11}_{−0.08} 37.9 226 50.1±10.1 12.9±5.6 26.7±7.0 39.6±8.5 10.5±6.2 29.8±7.3 17.2±7.0 -0.34^{+0.20}_{−0.18} -0.20^{+0.14}_{−0.23} 0.44^{+0.27}_{−0.29} 37.3 227 325.0±20.9 67.4±9.7 175.0±14.6 242.4±17.1 81.9±11.0 215.4±16.1 109.3±12.3 -0.38^{+0.05}_{−0.05} -0.33^{+0.06}_{−0.07} 0.36^{+0.06}_{−0.07} 38.1 228 506.0±25.4 80.3±10.4 300.1±18.6 380.4±21.0 125.9±13.0 322.0±19.3 174.9±15.0 -0.35^{+0.05}_{−0.04} -0.47^{+0.03}_{−0.08} 0.41^{+0.05}_{−0.05} 38.3 229 158.3±14.9 37.2±7.8 83.0±10.6 120.2±12.7 38.1±8.5 110.4±12.1 44.1±9.0 -0.48^{+0.08}_{−0.08} -0.26^{+0.09}_{−0.09} 0.35^{+0.12}_{−0.08} 37.8 230 104.6±12.8 19.7±6.3 65.1±9.6 84.8±11.1 19.7±7.0 74.3±10.3 27.7±7.8 -0.50^{+0.10}_{−0.11} -0.43^{+0.12}_{−0.15} 0.59^{+0.09}_{−0.20} 37.7 231 120.7±13.3 21.9±6.5 71.7±10.0 93.6±11.5 27.1±7.5 83.5±10.7 32.7±8.1 -0.49^{+0.09}_{−0.10} -0.43^{+0.10}_{−0.14} 0.43^{+0.14}_{−0.10} 37.7 232 35.8±11.1 30.7±7.3 1.7±4.6 32.4±8.2 4.3±5.5 12.9±6.1 6.7±6.0 -0.45^{+0.20}_{−0.55} 1.04^{+0.79}_{−0.40} -0.21^{+0.85}_{−1.00} 37.2 233 62.3±13.2 12.1±5.4 40.8±8.1 52.8±9.3 9.7±6.1 47.6±8.6 12.2±6.6 -0.65^{+0.16}_{−0.16} -0.47^{+0.21}_{−0.15} 0.65^{+0.29}_{−0.27} 37.4 234 43.9±8.5 1.5±3.2 16.7±5.6 18.2±6.0 25.7±6.6 14.3±5.3 30.8±7.1 0.31^{+0.18}_{−0.15} -0.84^{+0.49}_{−0.62} -0.16^{+0.16}_{−0.14} 37.3 235 7.5±7.2 -1.7±3.6 10.7±5.3 9.1±6.0 -1.5±4.6 7.1±5.2 0.6±5.1 -0.66^{+0.28}_{−0.34} -0.76^{+0.45}_{−1.00} 0.76^{+0.92}_{−0.53} 36.5

TABLE 4 — Continued

MID Net Counts HR C21 C32 Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12)

236 28.9±9.0 -0.7±4.0 18.8±6.3 18.1±7.0 10.9±6.3 16.6±6.4 14.1±6.7 -0.15^{+0.29}_{−0.26} -1.02^{+0.62}_{−0.76} 0.25^{+0.31}_{−0.26} 37.1

NOTE. — Col. (1): Master ID, cols. (2)−(8): net counts, in each of the 7 energy bands (see Table 2 for definitions of these bands), col. (9): hardness ratio, cols. (10) and (11) color values, col. (12): log L_X (0.3−8.0 keV). Upper limit L_X values are at the 68% confidence level.

TABLE 5 SOURCE COUNTS, HARDNESS RATIOS, COLOR-COLOR VALUES AND VARIABILITY: OBSERVATION 1

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

1 9.8±4.7 -1.0±1.9 1.1±2.7 0.1±2.7 9.7±4.4 0.0±2.3 10.5±4.6 0.94^{+0.06}_{−0.08} -0.38^{+0.91}_{−1.15} -0.72^{+0.43}_{−0.67} - - - 37.7 2 11.3±5.0 3.0±3.2 5.1±3.6 8.0±4.3 3.3±3.4 7.9±4.1 3.0±3.4 -0.58^{+0.24}_{−0.28} -0.08^{+0.35}_{−0.43} 0.19^{+0.45}_{−0.38} - - - 37.8 3 ≤3.9 - - - - - - - - - - - - ≤37.3 4 15.5±5.5 6.2±3.8 9.1±4.3 15.3±5.2 0.3±2.7 12.9±4.8 2.1±3.2 -0.81^{+0.11}_{−0.19} -0.05^{+0.24}_{−0.24} 0.84^{+0.84}_{−0.46} - - - 37.9 5 64.3±9.3 19.8±5.7 35.3±7.1 55.1±8.6 9.1±4.4 49.9±8.2 13.0±5.0 -0.63^{+0.09}_{−0.10} -0.10^{+0.08}_{−0.16} 0.59^{+0.18}_{−0.17} N N - 38.6 6 ≤2.0 - - - - - - - - - - - - ≤37.0 7 ≤0.6 - - - - - - - - - - - - ≤36.5 8 12.6±5.0 2.2±2.9 6.3±3.8 8.6±4.3 4.0±3.4 5.3±3.6 6.8±4.0 0.06^{+0.30}_{−0.30} -0.29^{+0.34}_{−0.46} 0.19^{+0.32}_{−0.30} - - - 37.8 9 ≤1.5 - - - - - - - - - - - - ≤36.9 10 ≤1.3 - - - - - - - - - - - - ≤36.8 11 ≤11.4 - - - - - - - - - - - - ≤37.8 12 ≤3.2 - - - - - - - - - - - - ≤37.2 13 50.2±8.3 14.1±5.0 26.3±6.3 40.4±7.5 9.8±4.4 33.0±6.9 14.7±5.1 -0.43^{+0.12}_{−0.14} -0.19^{+0.15}_{−0.14} 0.43^{+0.16}_{−0.16} N N - 38.4 14 22.3±6.1 4.3±3.4 14.6±5.0 18.8±5.6 3.5±3.4 14.4±5.0 7.4±4.1 -0.37^{+0.20}_{−0.21} -0.43^{+0.24}_{−0.27} 0.56^{+0.38}_{−0.27} N N - 38.1 15 12.7±5.0 2.1±2.9 6.4±3.8 8.5±4.3 4.2±3.4 7.1±4.0 6.1±3.8 -0.14^{+0.27}_{−0.30} -0.32^{+0.37}_{−0.48} 0.19^{+0.32}_{−0.27} - - - 37.8 16 ≤2.1 - - - - - - - - - - - - ≤37.1 17 ≤8.4 - - - - - - - - - - - - ≤37.7 18 ≤1.1 - - - - - - - - - - - - ≤36.8 19 ≤1.0 - - - - - - - - - - - - ≤36.7 20 ≤1.1 - - - - - - - - - - - - ≤36.8 21 3.7±3.6 0.5±2.3 2.1±2.9 2.5±3.2 1.1±2.7 3.2±3.2 0.8±2.7 -0.67^{+0.25}_{−0.33} -0.31^{+0.69}_{−0.91} 0.19^{+0.80}_{−0.67} - - - 37.3 22 ≤1.6 - - - - - - - - - - - - ≤36.9 23 6.6±4.1 3.4±3.2 4.1±3.4 7.5±4.1 -0.9±1.9 6.1±3.8 -0.2±2.3 -0.93^{+0.11}_{−0.07} 0.00^{+0.38}_{−0.35} 0.99^{+1.00}_{−0.61} - - - 37.5 24 ≤10.7 - - - - - - - - - - - - ≤37.7 25 ≤4.7 - - - - - - - - - - - - ≤37.4 26 ≤9.4 - - - - - - - - - - - - ≤37.7 27 ≤0.5 - - - - - - - - - - - - ≤36.4 28 ≤1.1 - - - - - - - - - - - - ≤36.7 29 11.9±4.9 3.5±3.2 7.5±4.0 11.0±4.6 0.9±2.7 9.3±4.3 1.8±2.9 -0.76^{+0.14}_{−0.24} -0.21^{+0.26}_{−0.33} 0.69^{+0.76}_{−0.38} - - - 37.8 30 ≤1.4 - - - - - - - - - - - - ≤37.1 31 40.6±7.6 9.3±4.3 19.0±5.6 28.3±6.5 12.2±4.7 23.9±6.1 16.0±5.2 -0.25^{+0.13}_{−0.17} -0.21^{+0.16}_{−0.19} 0.21^{+0.17}_{−0.15} N N - 38.3 32 ≤0.5 - - - - - - - - - - - - ≤36.4 33 ≤0.9 - - - - - - - - - - - - ≤36.7 34 ≤0.7 - - - - - - - - - - - - ≤36.6 35 13.1±5.0 3.6±3.2 9.6±4.3 13.1±4.8 -0.1±2.3 13.7±4.8 -0.3±2.3 -0.98^{+0.05}_{−0.02} -0.32^{+0.27}_{−0.30} 1.07^{+0.84}_{−0.54} - - - 37.9 36 ≤2.3 - - - - - - - - - - - - ≤37.1 37 ≤0.5 - - - - - - - - - - - - ≤36.5 38 ≤7.5 - - - - - - - - - - - - ≤37.6 39 11.8±3.5 1.4±2.7 6.4±3.8 7.7±4.1 4.2±3.4 7.2±4.0 4.2±3.4 -0.33^{+0.28}_{−0.31} -0.46^{+0.41}_{−0.59} 0.19^{+0.29}_{−0.30} - - - 37.8 40 7.7±2.4 0.7±2.3 4.4±3.4 5.1±3.6 2.5±2.9 5.3±3.6 3.4±3.2 -0.29^{+0.31}_{−0.36} -0.53^{+0.53}_{−0.69} 0.24^{+0.40}_{−0.37} - - - 37.6 41 56.7±8.7 10.6±4.4 30.9±6.7 41.5±7.6 15.2±5.1 35.7±7.1 20.1±5.7 -0.34^{+0.11}_{−0.13} -0.38^{+0.15}_{−0.16} 0.32^{+0.17}_{−0.11} N N - 38.5 42 16.7±5.3 3.8±3.2 8.6±4.1 12.4±4.7 4.3±3.4 11.7±4.6 5.1±3.6 -0.44^{+0.22}_{−0.24} -0.27^{+0.27}_{−0.27} 0.29^{+0.30}_{−0.24} - - - 38.2 43 16.0±5.3 6.5±3.8 8.6±4.1 15.1±5.1 0.9±2.7 12.4±4.7 0.8±2.7 -0.92^{+0.08}_{−0.08} -0.03^{+0.22}_{−0.24} 0.75^{+0.75}_{−0.43} - - - 37.9 44 ≤9.7 - - - - - - - - - - - - ≤37.7 45 ≤4.7 - - - - - - - - - - - - ≤37.4 46 ≤4.8 - - - - - - - - - - - - ≤37.4 47 ≤0.9 - - - - - - - - - - - - ≤36.7 48 ≤10.0 - - - - - - - - - - - - ≤37.7 49 ≤1.4 - - - - - - - - - - - - ≤36.9 50 14.3±5.2 4.1±3.4 8.3±4.1 12.5±4.8 1.8±2.9 9.0±4.3 3.7±3.4 -0.49^{+0.26}_{−0.29} -0.21^{+0.26}_{−0.30} 0.56^{+0.57}_{−0.37} - - - 37.9

TABLE 5 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

51 ≤1.3 - - - - - - - - - - - - ≤36.8 52 ≤4.9 - - - - - - - - - - - - ≤37.4 53 ≤6.0 - - - - - - - - - - - - ≤37.5 54 ≤4.2 - - - - - - - - - - - - ≤37.3 55 ≤4.0 - - - - - - - - - - - - ≤37.3 56 ≤8.0 - - - - - - - - - - - - ≤37.6 57 ≤2.7 - - - - - - - - - - - - ≤37.2 58 ≤3.1 - - - - - - - - - - - - ≤37.2 59 ≤0.7 - - - - - - - - - - - - ≤36.6 60 ≤2.0 - - - - - - - - - - - - ≤37.0 61 ≤6.9 - - - - - - - - - - - - ≤37.6 62 ≤0.5 - - - - - - - - - - - - ≤36.4 63 8.9±4.6 2.2±2.9 4.1±3.4 6.2±4.0 2.7±3.2 5.9±3.8 3.4±3.4 -0.36^{+0.34}_{−0.36} -0.13^{+0.42}_{−0.51} 0.16^{+0.51}_{−0.43} - - - 37.7 64 ≤2.3 - - - - - - - - - - - - ≤37.1 65 ≤10.5 - - - - - - - - - - - - ≤37.7 66 23.1±6.3 9.0±4.3 11.4±4.7 20.4±5.9 2.6±3.2 15.7±5.3 5.5±3.8 -0.53^{+0.18}_{−0.21} -0.03^{+0.22}_{−0.18} 0.59^{+0.46}_{−0.32} N N - 38.1 67 11.8±4.9 3.4±3.2 5.5±3.6 8.8±4.3 3.0±3.2 5.3±3.6 4.8±3.6 -0.11^{+0.33}_{−0.35} -0.11^{+0.30}_{−0.35} 0.24^{+0.40}_{−0.35} - - - 37.8 68 21.0±6.0 3.9±3.4 8.2±4.1 12.1±4.8 9.0±4.3 11.7±4.7 9.8±4.4 -0.15^{+0.21}_{−0.23} -0.21^{+0.29}_{−0.33} 0.00^{+0.21}_{−0.21} N N - 38.0 69 8.0±4.3 1.4±2.7 4.7±3.4 6.1±3.8 1.9±2.9 6.3±3.8 1.9±2.9 -0.64^{+0.17}_{−0.24} -0.35^{+0.43}_{−0.59} 0.35^{+0.56}_{−0.43} - - - 37.6 70 4.6±4.2 0.2±2.7 3.6±3.4 3.8±3.8 0.8±2.7 4.3±3.8 0.7±2.7 -0.73^{+0.23}_{−0.27} -0.38^{+0.53}_{−1.00} 0.46^{+0.76}_{−0.61} - - - 37.4 71 9.7±4.6 0.3±2.3 4.7±3.4 5.0±3.6 4.7±3.6 4.5±3.4 4.6±3.6 -0.06^{+0.37}_{−0.36} -0.61^{+0.53}_{−0.84} 0.03^{+0.29}_{−0.32} - - - 37.7 72 18.3±5.7 7.3±4.0 7.4±4.0 14.7±5.1 3.6±3.4 12.1±4.7 4.5±3.6 -0.51^{+0.22}_{−0.24} 0.08^{+0.21}_{−0.24} 0.29^{+0.38}_{−0.29} - - - 38.0 73 8.2±5.0 2.1±2.9 3.7±3.4 5.8±4.0 1.8±2.9 1.2±2.9 3.6±3.4 0.48^{+0.52}_{−0.29} -0.11^{+0.46}_{−0.56} 0.27^{+0.64}_{−0.51} - - - 37.6 74 13.6±5.6 2.3±2.9 7.0±4.0 9.3±4.4 4.1±3.4 8.8±4.3 3.8±3.4 -0.46^{+0.26}_{−0.29} -0.35^{+0.35}_{−0.43} 0.24^{+0.30}_{−0.29} - - - 37.8 75 ≤2.8 - - - - - - - - - - - - ≤37.2 76 19.3±5.9 4.8±3.6 5.6±3.8 10.4±4.7 8.9±4.3 8.9±4.4 9.6±4.4 -0.02^{+0.24}_{−0.26} 0.03^{+0.29}_{−0.32} -0.16^{+0.24}_{−0.27} - - - 38.0 77 ≤0.7 - - - - - - - - - - - - ≤36.6 78 21.8±6.1 5.1±3.6 9.9±4.4 15.0±5.2 6.7±4.0 14.6±5.1 6.5±4.0 -0.44^{+0.20}_{−0.22} -0.19^{+0.24}_{−0.27} 0.19^{+0.24}_{−0.22} N N - 38.1 79 ≤1.1 - - - - - - - - - - - - ≤36.7 80 ≤6.0 - - - - - - - - - - - - ≤37.5 81 ≤7.0 - - - - - - - - - - - - ≤37.6 82 ≤1.1 - - - - - - - - - - - - ≤36.8 83 ≤1.9 - - - - - - - - - - - - ≤37.0 84 36.6±8.8 5.4±4.3 24.0±6.1 29.3±7.0 7.5±4.2 24.0±6.4 13.5±5.0 -0.33^{+0.16}_{−0.17} -0.51^{+0.24}_{−0.40} 0.51^{+0.21}_{−0.19} N N - 38.3 85 ≤19.2 - - - - - - - - - - - - ≤38.0 86 ≤2.1 - - - - - - - - - - - - ≤37.1 87 ≤8.7 - - - - - - - - - - - - ≤37.7 88 ≤5.7 - - - - - - - - - - - - ≤37.5 89 ≤0.9 - - - - - - - - - - - - ≤36.7 90 ≤9.1 - - - - - - - - - - - - ≤37.7 91 ≤1.1 - - - - - - - - - - - - ≤36.8 92 ≤0.5 - - - - - - - - - - - - ≤36.4 93 ≤2.1 - - - - - - - - - - - - ≤37.0 94 ≤6.3 - - - - - - - - - - - - ≤37.5 95 ≤0.9 - - - - - - - - - - - - ≤36.7 96 70.0±9.7 14.8±5.1 39.9±7.5 54.7±8.6 15.3±5.2 47.0±8.1 19.3±5.7 -0.47^{+0.10}_{−0.12} -0.30^{+0.09}_{−0.18} 0.44^{+0.14}_{−0.14} N N - 38.6 97 ≤8.6 - - - - - - - - - - - - ≤37.7 98 22.6±7.9 2.5±4.0 17.0±5.5 19.5±6.3 3.6±3.6 15.3±5.7 6.6±4.2 -0.46^{+0.22}_{−0.24} -0.59^{+0.38}_{−0.67} 0.64^{+0.43}_{−0.32} - - - 38.1 99 37.2±8.4 9.3±5.1 20.9±6.1 30.2±7.5 7.0±4.3 24.8±6.8 10.6±4.9 -0.46^{+0.17}_{−0.18} -0.31^{+0.26}_{−0.22} 0.48^{+0.24}_{−0.24} N N - 38.3 100 ≤3.1 - - - - - - - - - - - - ≤37.2 101 ≤27.6 - - - - - - - - - - - - ≤38.2 102 ≤1.2 - - - - - - - - - - - - ≤36.8

TABLE 5 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

103 17.6±5.7 7.2±4.0 5.9±3.8 13.1±5.0 4.4±3.6 10.5±4.6 5.3±3.8 -0.39^{+0.24}_{−0.27} 0.16^{+0.24}_{−0.27} 0.13^{+0.35}_{−0.29} - - - 38.0 104 ≤14.3 - - - - - - - - - - - - ≤37.9 105 ≤27.9 - - - - - - - - - - - - ≤38.2 106 ≤18.0 - - - - - - - - - - - - ≤38.0 107 8.1±4.3 3.6±3.2 0.5±2.3 4.1±3.4 4.1±3.4 4.3±3.4 4.0±3.4 -0.12^{+0.38}_{−0.38} 0.61^{+0.77}_{−0.53} -0.53^{+0.53}_{−0.85} - - - 37.6 108 9.1±4.6 3.2±3.2 3.4±3.2 6.6±4.0 2.5±3.2 7.0±4.0 2.3±3.2 -0.62^{+0.17}_{−0.27} 0.05^{+0.38}_{−0.40} 0.13^{+0.54}_{−0.45} - - - 37.7 109 ≤2.8 - - - - - - - - - - - - ≤37.2 110 ≤1.9 - - - - - - - - - - - - ≤37.0 111 13.1±5.3 5.7±3.8 4.7±3.6 10.4±4.7 2.7±3.2 6.9±4.1 2.5±3.2 -0.57^{+0.21}_{−0.33} 0.16^{+0.32}_{−0.32} 0.21^{+0.51}_{−0.40} - - - 37.8 112 ≤2.1 - - - - - - - - - - - - ≤37.0 113 ≤1.1 - - - - - - - - - - - - ≤36.8 114 ≤15.4 - - - - - - - - - - - - ≤37.9 115 7.8±4.6 3.0±3.2 3.5±3.4 6.4±4.1 1.4±2.9 7.1±4.1 1.1±2.9 -0.81^{+0.17}_{−0.19} 0.03^{+0.48}_{−0.49} 0.29^{+0.78}_{−0.58} - - - 37.6 116 ≤4.4 - - - - - - - - - - - - ≤37.4 117 6979.8±84.8 2002.4±45.9 3571.8±60.9 5574.1±75.9 1405.7±38.6 4668.9±69.51899.4±44.7 -0.47^{+0.01}_{−0.01} -0.18^{+0.02}_{−0.01} 0.44^{+0.01}_{−0.02} N N - 40.6 118 34.2±7.9 7.8±4.8 21.2±6.0 29.0±7.2 5.3±3.8 24.1±6.6 8.0±4.3 -0.55^{+0.15}_{−0.17} -0.32^{+0.21}_{−0.30} 0.59^{+0.30}_{−0.21} N N - 38.2 119 103.9±14.9 14.8±7.0 58.3±9.7 73.0±11.6 31.2±7.3 56.6±10.5 45.3±8.4 -0.17^{+0.10}_{−0.13} -0.54^{+0.25}_{−0.19} 0.28^{+0.12}_{−0.09} N N - 38.7 120 50.8±12.9 17.1±7.7 24.7±8.0 41.8±10.7 8.4±5.1 39.0±10.1 10.2±5.6 -0.65^{+0.15}_{−0.18} -0.03^{+0.17}_{−0.32} 0.49^{+0.29}_{−0.27} N N - 38.4 121 ≤0.8 - - - - - - - - - - - - ≤36.6 122 ≤1.1 - - - - - - - - - - - - ≤36.7 123 ≤26.8 - - - - - - - - - - - - ≤38.1 124 ≤20.2 - - - - - - - - - - - - ≤38.0 125 10.1±4.7 2.3±2.9 6.3±3.8 8.6±4.3 1.5±2.9 7.9±4.1 2.4±3.2 -0.64^{+0.16}_{−0.26} -0.29^{+0.37}_{−0.43} 0.51^{+0.67}_{−0.43} - - - 37.7 126 ≤2.3 - - - - - - - - - - - - ≤37.1 127 ≤3.6 - - - - - - - - - - - - ≤37.3 128 ≤19.8 - - - - - - - - - - - - ≤38.0 129 ≤3.1 - - - - - - - - - - - - ≤37.2 130 ≤2.3 - - - - - - - - - - - - ≤37.1 131 ≤1.8 - - - - - - - - - - - - ≤37.0 132 ≤27.0 - - - - - - - - - - - - ≤38.1 133 27.5±6.6 3.2±3.2 17.4±5.3 20.6±5.8 6.9±4.0 18.1±5.4 9.8±4.4 -0.35^{+0.17}_{−0.19} -0.59^{+0.24}_{−0.35} 0.40^{+0.22}_{−0.19} N N - 38.2 134 ≤1.6 - - - - - - - - - - - - ≤36.9 135 ≤10.6 - - - - - - - - - - - - ≤37.7 136 ≤1.2 - - - - - - - - - - - - ≤36.8 137 8.3±6.6 1.4±3.9 7.3±5.1 8.8±5.9 -0.5±3.3 5.6±5.5 1.2±3.7 -0.60^{+0.27}_{−0.40} -0.38^{+0.61}_{−0.84} 0.69^{+0.99}_{−0.61} - - - 37.6 138 ≤5.6 - - - - - - - - - - - - ≤37.5 139 ≤0.8 - - - - - - - - - - - - ≤36.6 140 46.7±8.2 11.3±4.7 25.6±6.3 36.9±7.4 9.8±4.4 31.6±6.9 13.7±5.0 -0.45^{+0.13}_{−0.14} -0.27^{+0.16}_{−0.16} 0.43^{+0.16}_{−0.16} N N - 38.4 141 ≤2.8 - - - - - - - - - - - - ≤37.2 142 ≤3.9 - - - - - - - - - - - - ≤37.3 143 6.6±4.1 0.5±2.3 3.4±3.2 3.8±3.4 2.7±3.2 1.2±2.7 5.6±3.8 0.67^{+0.33}_{−0.21} -0.46^{+0.54}_{−0.84} 0.11^{+0.48}_{−0.46} - - - 37.5 144 ≤4.1 - - - - - - - - - - - - ≤37.3 145 ≤8.7 - - - - - - - - - - - - ≤37.7 146 113.3±14.6 23.1±6.6 63.4±9.5 86.5±11.1 26.8±6.6 75.9±10.5 34.5±7.3 -0.43^{+0.08}_{−0.09} -0.36^{+0.12}_{−0.12} 0.41^{+0.11}_{−0.10} N N - 38.8 147 ≤27.4 - - - - - - - - - - - - ≤38.2 148 23.2±6.4 6.5±4.0 14.1±5.1 20.6±6.0 2.6±3.2 19.3±5.8 4.3±3.6 -0.69^{+0.16}_{−0.18} -0.24^{+0.21}_{−0.24} 0.67^{+0.46}_{−0.32} N P - 38.1 149 ≤1.0 - - - - - - - - - - - - ≤36.8 150 ≤7.5 - - - - - - - - - - - - ≤37.6 151 ≤2.1 - - - - - - - - - - - - ≤37.0 152 ≤1.2 - - - - - - - - - - - - ≤36.8 153 13.3±5.6 1.3±3.3 9.3±4.5 10.6±5.0 2.8±3.2 9.5±4.8 3.3±3.5 -0.58^{+0.22}_{−0.29} -0.53^{+0.38}_{−0.77} 0.48^{+0.46}_{−0.35} - - - 37.9 154 17.9±7.4 1.4±3.5 8.6±4.6 10.1±5.3 7.6±4.2 8.1±4.9 10.6±4.6 0.11^{+0.28}_{−0.33} -0.46^{+0.46}_{−0.76} 0.08^{+0.24}_{−0.27} - - - 38.0

TABLE 5 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

155 17.4±5.7 5.1±3.6 9.7±4.4 14.8±5.2 2.6±3.2 13.3±5.0 3.4±3.4 -0.66^{+0.18}_{−0.22} -0.19^{+0.24}_{−0.27} 0.54^{+0.45}_{−0.35} - - - 38.0 156 ≤1.7 - - - - - - - - - - - - ≤36.9 157 19.2±6.0 6.4±4.0 8.2±4.3 14.6±5.3 4.6±3.6 11.2±4.8 7.4±4.1 -0.27^{+0.24}_{−0.25} -0.03^{+0.27}_{−0.24} 0.27^{+0.29}_{−0.30} - - - 38.1 158 108.9±15.1 20.3±5.8 60.5±8.9 80.7±10.2 28.4±6.5 71.3±9.6 36.3±7.2 -0.38^{+0.08}_{−0.10} -0.39^{+0.11}_{−0.12} 0.35^{+0.11}_{−0.09} N N - 38.7 159 ≤1.0 - - - - - - - - - - - - ≤36.7 160 ≤7.8 - - - - - - - - - - - - ≤37.6 161 ≤3.4 - - - - - - - - - - - - ≤37.2 162 ≤9.4 - - - - - - - - - - - - ≤37.7 163 67.3±12.4 15.0±5.2 38.3±7.4 53.3±8.6 14.4±5.1 48.9±8.3 15.3±5.2 -0.57^{+0.10}_{−0.11} -0.30^{+0.12}_{−0.16} 0.45^{+0.13}_{−0.15} N P - 38.5 164 10.0±4.7 3.3±3.2 5.2±3.6 8.5±4.3 1.5±2.9 6.9±4.0 2.4±3.2 -0.59^{+0.20}_{−0.31} -0.11^{+0.35}_{−0.35} 0.43^{+0.67}_{−0.46} - - - 37.7 165 7.5±4.5 3.3±3.2 5.6±3.8 8.8±4.4 -1.4±1.9 7.5±4.1 0.3±2.7 -0.90^{+0.12}_{−0.10} -0.13^{+0.34}_{−0.38} 1.07^{+1.07}_{−0.54} - - - 37.6 166 ≤11.0 - - - - - - - - - - - - ≤37.8 167 ≤7.3 - - - - - - - - - - - - ≤37.6 168 ≤5.0 - - - - - - - - - - - - ≤37.4 169 19.4±5.8 6.1±3.8 12.3±4.7 18.4±5.6 1.0±2.7 14.8±5.1 2.8±3.2 -0.74^{+0.15}_{−0.19} -0.21^{+0.21}_{−0.25} 0.89^{+0.72}_{−0.41} - - - 38.0 170 15.5±5.3 5.2±3.6 9.1±4.3 14.3±5.1 1.2±2.7 13.1±4.8 1.8±2.9 -0.84^{+0.10}_{−0.16} -0.13^{+0.24}_{−0.27} 0.75^{+0.64}_{−0.43} - - - 37.9 171 ≤6.6 - - - - - - - - - - - - ≤37.5 172 ≤2.5 - - - - - - - - - - - - ≤37.1 173 ≤1.2 - - - - - - - - - - - - ≤36.8 174 ≤1.1 - - - - - - - - - - - - ≤36.7 175 ≤1.2 - - - - - - - - - - - - ≤36.8 176 ≤1.7 - - - - - - - - - - - - ≤37.0 177 ≤3.5 - - - - - - - - - - - - ≤37.3 178 ≤0.5 - - - - - - - - - - - - ≤36.4 179 16.3±5.7 5.1±3.6 7.5±4.1 12.6±5.0 3.7±3.6 11.1±4.7 5.6±4.0 -0.41^{+0.25}_{−0.27} -0.08^{+0.27}_{−0.30} 0.29^{+0.41}_{−0.34} - - - 37.9 180 ≤3.1 - - - - - - - - - - - - ≤37.2 181 7.5±4.5 0.8±2.7 4.9±3.6 5.7±4.0 1.8±2.9 4.4±3.6 3.7±3.4 -0.17^{+0.40}_{−0.43} -0.46^{+0.54}_{−0.76} 0.38^{+0.59}_{−0.46} - - - 37.6 182 ≤12.1 - - - - - - - - - - - - ≤37.8 183 10.0±4.6 2.5±2.9 7.5±4.0 10.0±4.4 0.0±2.3 7.4±4.0 0.8±2.7 -0.86^{+0.14}_{−0.14} -0.35^{+0.32}_{−0.37} 0.92^{+0.91}_{−0.46} - - - 37.7 184 98.2±11.1 20.1±5.7 53.1±8.4 73.1±9.7 25.1±6.2 65.6±9.2 29.8±6.6 -0.43^{+0.08}_{−0.10} -0.31^{+0.08}_{−0.15} 0.35^{+0.12}_{−0.09} N N - 38.7 185 48.9±8.3 9.4±4.4 27.7±6.5 37.1±7.4 11.9±4.7 29.6±6.7 16.8±5.3 -0.33^{+0.12}_{−0.16} -0.38^{+0.17}_{−0.18} 0.39^{+0.15}_{−0.16} N N - 38.4 186 10.9±5.0 2.7±3.2 5.0±3.6 7.6±4.3 3.3±3.4 7.3±4.1 4.1±3.6 -0.36^{+0.32}_{−0.34} -0.13^{+0.40}_{−0.49} 0.19^{+0.43}_{−0.40} - - - 37.7 187 2.9±3.8 -0.3±2.3 1.7±2.9 1.4±3.2 1.6±2.9 2.1±3.2 1.4±2.9 -0.25^{+0.25}_{−0.75} -0.31^{+0.84}_{−1.07} 0.05^{+0.81}_{−0.80} - - - 37.2 188 ≤1.0 - - - - - - - - - - - - ≤36.7 189 12.8±5.5 6.7±4.0 2.3±3.2 9.0±4.6 3.1±3.2 5.6±4.0 5.9±3.8 -0.01^{+0.32}_{−0.37} 0.46^{+0.53}_{−0.41} -0.05^{+0.51}_{−0.62} - - - 37.8 190 11.8±5.0 1.7±2.9 7.0±4.0 8.7±4.4 3.0±3.2 9.3±4.4 2.9±3.2 -0.60^{+0.22}_{−0.27} -0.40^{+0.40}_{−0.62} 0.35^{+0.40}_{−0.32} - - - 37.8 191 12.3±5.1 1.6±2.9 7.8±4.1 9.3±4.6 2.9±3.2 8.8±4.4 3.8±3.4 -0.47^{+0.26}_{−0.29} -0.48^{+0.43}_{−0.65} 0.40^{+0.40}_{−0.32} - - - 37.8 192 ≤7.7 - - - - - - - - - - - - ≤37.6 193 ≤4.2 - - - - - - - - - - - - ≤37.3 194 66.6±10.0 12.0±4.7 41.7±7.6 53.7±8.5 12.0±4.7 42.2±7.7 18.8±5.6 -0.44^{+0.10}_{−0.12} -0.46^{+0.15}_{−0.14} 0.56^{+0.15}_{−0.14} N P - 38.5 195 ≤9.2 - - - - - - - - - - - - ≤37.7 196 ≤9.7 - - - - - - - - - - - - ≤37.7 197 ≤9.8 - - - - - - - - - - - - ≤37.7 198 ≤2.5 - - - - - - - - - - - - ≤37.1 199 ≤2.0 - - - - - - - - - - - - ≤37.0 200 ≤1.1 - - - - - - - - - - - - ≤36.8 201 ≤4.7 - - - - - - - - - - - - ≤37.4 202 4.4±3.8 -0.7±1.9 4.3±3.4 3.7±3.4 0.7±2.7 2.2±2.9 2.5±3.2 -0.01^{+0.54}_{−0.52} -0.92^{+0.61}_{−0.99} 0.53^{+0.77}_{−0.53} - - - 37.4 203 5.6±4.0 2.4±2.9 1.4±2.7 3.8±3.4 1.8±2.9 4.2±3.4 1.7±2.9 -0.56^{+0.23}_{−0.44} 0.24^{+0.67}_{−0.59} -0.05^{+0.72}_{−0.75} - - - 37.5 204 339.4±19.5 100.4±11.1 194.2±15.0 294.5±18.2 44.8±7.8 252.0±16.9 68.7±9.4 -0.61^{+0.04}_{−0.05} -0.19^{+0.03}_{−0.07} 0.68^{+0.06}_{−0.08} N N - 39.2 205 9.2±4.6 2.4±2.9 6.1±3.8 8.5±4.3 0.7±2.7 5.0±3.6 2.6±3.2 -0.44^{+0.31}_{−0.38} -0.27^{+0.35}_{−0.43} 0.69^{+0.76}_{−0.46} - - - 37.7

TABLE 5 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

206 ≤3.1 - - - - - - - - - - - - ≤37.2 207 ≤3.3 - - - - - - - - - - - - ≤37.2 208 ≤3.5 - - - - - - - - - - - - ≤37.3 209 14.7±5.2 0.5±2.3 10.3±4.4 10.8±4.6 3.8±3.4 11.1±4.6 3.8±3.4 -0.55^{+0.22}_{−0.25} -0.84^{+0.38}_{−0.84} 0.40^{+0.32}_{−0.27} - - - 37.9 210 ≤6.4 - - - - - - - - - - - - ≤37.5 211 ≤8.5 - - - - - - - - - - - - ≤37.6 212 ≤2.0 - - - - - - - - - - - - ≤37.0 213 ≤7.6 - - - - - - - - - - - - ≤37.6 214 ≤1.3 - - - - - - - - - - - - ≤36.8 215 ≤1.1 - - - - - - - - - - - - ≤36.8 216 8.8±4.4 1.3±2.7 7.2±4.0 8.5±4.3 0.2±2.3 8.1±4.1 1.1±2.7 -0.84^{+0.13}_{−0.16} -0.54^{+0.43}_{−0.61} 0.92^{+0.76}_{−0.54} - - - 37.7 217 ≤2.3 - - - - - - - - - - - - ≤37.1 218 ≤3.3 - - - - - - - - - - - - ≤37.2 219 ≤1.6 - - - - - - - - - - - - ≤36.9 220 18.9±5.8 2.0±2.9 14.2±5.0 16.3±5.3 2.6±3.2 13.8±5.0 5.4±3.8 -0.50^{+0.21}_{−0.22} -0.67^{+0.35}_{−0.48} 0.67^{+0.46}_{−0.32} - - - 38.0 221 ≤1.7 - - - - - - - - - - - - ≤37.0 222 ≤2.4 - - - - - - - - - - - - ≤37.7 223 1.2±3.0 1.4±2.7 -0.7±1.9 0.7±2.7 0.5±2.3 1.2±2.7 0.4±2.3 -0.42^{+0.28}_{−0.58} 0.61^{+1.15}_{−0.76} -0.31^{+1.00}_{−1.14} - - - 36.8 224 ≤10.8 - - - - - - - - - - - - ≤37.8 225 15.8±5.3 5.5±3.6 7.4±4.0 12.9±4.8 2.9±3.2 12.3±4.7 3.7±3.4 -0.60^{+0.20}_{−0.24} -0.03^{+0.24}_{−0.26} 0.38^{+0.40}_{−0.33} - - - 37.9 226 ≤1.9 - - - - - - - - - - - - ≤37.0 227 34.1±7.4 5.4±3.6 18.3±5.4 23.7±6.1 10.1±4.4 21.0±5.8 13.1±4.8 -0.30^{+0.16}_{−0.17} -0.43^{+0.22}_{−0.21} 0.28^{+0.18}_{−0.17} N N - 38.3 228 13.5±5.3 1.5±2.7 6.2±3.8 7.7±4.1 4.7±3.6 8.1±4.1 5.5±3.8 -0.27^{+0.27}_{−0.29} -0.43^{+0.40}_{−0.54} 0.13^{+0.33}_{−0.26} - - - 37.8 229 12.7±5.0 0.4±2.3 8.3±4.1 8.7±4.3 4.0±3.4 9.2±4.3 3.8±3.4 -0.50^{+0.25}_{−0.27} -0.76^{+0.38}_{−0.84} 0.32^{+0.32}_{−0.27} - - - 37.8 230 ≤9.8 - - - - - - - - - - - - ≤37.7 231 11.5±4.9 3.1±3.2 7.3±4.0 10.5±4.6 1.0±2.7 9.1±4.3 1.8±2.9 -0.77^{+0.13}_{−0.23} -0.24^{+0.32}_{−0.35} 0.67^{+0.72}_{−0.43} - - - 37.8 232 ≤2.7 - - - - - - - - - - - - ≤37.2 233 ≤7.3 - - - - - - - - - - - - ≤37.6 234 ≤1.8 - - - - - - - - - - - - ≤37.0 235 ≤5.1 - - - - - - - - - - - - ≤37.4 236 ≤1.1 - - - - - - - - - - - - ≤36.8

NOTE. — Col. (1): Master ID, cols. (2)−(8): net counts, in each of the 7 energy bands (see Table 2 for definitions of these bands), col. (9): hardness ratio, cols. (10) and (11) color values, errors are given as 1σ, cols. (12) and (13): short-term variability, where (BB) indicate Bayesian block analysis and (K-S) indicates the Kolmogorov-Smirnov test, in both columns symbols indicate - (N) non-variable in all observations, (V) variable in at least one observation, (P) possible variability in at least one observation, col. (14): the significance of the change in L_X between the previous observation and the current observation respectively (equation 2), col. (15): log L_X (0.3−8.0 keV). Upper limit values of net B and L_X are at the 68% confidence level.

TABLE 6 SOURCE COUNTS, HARDNESS RATIOS, COLOR-COLOR VALUES AND VARIABILITY: OBSERVATION 2

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

1 30.6±7.9 1.3±3.4 9.1±4.6 10.4±5.2 20.2±6.5 9.0±4.6 21.2±6.6 0.35^{+0.21}_{−0.20} -0.48^{+0.42}_{−0.83} -0.30^{+0.19}_{−0.22} N N 0.2 37.8 2 64.6±10.8 4.3±4.0 45.5±8.1 49.8±8.6 14.9±6.0 42.9±7.9 18.0±6.4 -0.47^{+0.15}_{−0.12} -0.88^{+0.28}_{−0.37} 0.49^{+0.19}_{−0.14} N P 1.7 38.1 3 ≤6.6 - - - - - - - - - - - 0.0 ≤37.1 4 71.0±11.2 23.3±6.2 35.4±7.3 58.7±9.1 12.1±5.7 52.3±8.5 14.2±6.0 -0.62^{+0.13}_{−0.11} -0.06^{+0.09}_{−0.15} 0.43^{+0.25}_{−0.13} N P 1.3 38.1 5 170.3±14.7 48.7±8.3 93.7±10.9 142.3±13.2 28.0±7.1 120.1±12.2 41.2±8.1 -0.54^{+0.07}_{−0.06} -0.17^{+0.06}_{−0.10} 0.55^{+0.10}_{−0.11} N N 0.4 38.5 6 ≤1.8 - - - - - - - - - - - 0.0 ≤36.5 7 ≤4.4 - - - - - - - - - - - 0.0 ≤36.9 8 32.2±7.7 11.0±4.7 23.0±6.2 34.0±7.3 -1.8±3.4 28.9±6.7 0.4±4.0 -0.97^{+0.06}_{−0.03} -0.22^{+0.16}_{−0.18} 1.30^{+0.92}_{−0.46} N N 0.2 37.8 9 ≤8.6 - - - - - - - - - - - 0.0 ≤37.2 10 ≤2.2 - - - - - - - - - - - 0.0 ≤36.6 11 11.2±5.5 2.1±3.2 5.2±3.8 7.3±4.4 3.8±4.0 3.6±3.6 7.5±4.6 0.34^{+0.39}_{−0.37} -0.21^{+0.45}_{−0.62} 0.11^{+0.53}_{−0.40} - - 1.1 37.3 12 4.2±3.6 -0.3±1.9 1.5±2.7 1.2±2.7 3.0±3.2 1.5±2.7 2.8±3.2 0.24^{+0.57}_{−0.37} -0.53^{+0.76}_{−1.07} -0.19^{+0.51}_{−0.61} - - 0.4 36.9 13 385.3±21.0 99.0±11.1 225.8±16.2 324.8±19.2 60.5±9.2 273.8±17.7 88.5±10.8 -0.56^{+0.04}_{−0.04} -0.25^{+0.03}_{−0.07} 0.59^{+0.07}_{−0.06} N N 7.6 38.9 14 69.7±10.0 17.3±5.4 31.3±6.9 48.6±8.3 21.1±6.3 44.5±7.9 24.0±6.6 -0.36^{+0.12}_{−0.12} -0.16^{+0.13}_{−0.14} 0.18^{+0.15}_{−0.12} N N 0.3 38.1 15 25.0±6.8 3.6±3.4 14.7±5.2 18.3±5.8 6.7±4.4 16.7±5.4 9.0±4.8 -0.37^{+0.22}_{−0.22} -0.48^{+0.27}_{−0.35} 0.35^{+0.27}_{−0.24} N N 0.7 37.7 16 ≤6.6 - - - - - - - - - - - 0.0 ≤37.1 17 47.5±8.8 9.4±4.6 32.5±7.1 41.9±8.0 5.6±4.4 36.1±7.4 9.5±5.1 -0.64^{+0.15}_{−0.13} -0.43^{+0.16}_{−0.19} 0.72^{+0.35}_{−0.24} N N 2.6 38.0 18 1.8±4.2 1.0±2.9 -0.7±2.3 0.3±3.2 1.5±3.4 0.7±2.9 1.2±3.4 0.10^{+0.90}_{−0.05} 0.46^{+1.07}_{−0.99} -0.46^{+0.99}_{−1.07} - - 0.3 36.5 19 12.3±5.5 4.0±3.6 8.2±4.3 12.3±5.1 0.0±2.9 11.1±4.7 0.6±3.2 -0.91^{+0.11}_{−0.09} -0.19^{+0.30}_{−0.37} 0.76^{+0.92}_{−0.45} - - 2.0 37.4 20 ≤12.1 - - - - - - - - - - - 1.6 ≤37.4 21 ≤14.1 - - - - - - - - - - - 0.1 ≤37.4 22 ≤11.2 - - - - - - - - - - - 1.2 ≤37.4 23 15.8±6.0 5.7±4.0 12.4±4.8 18.1±5.8 -2.3±2.7 15.9±5.3 -0.7±3.2 -0.97^{+0.07}_{−0.03} -0.21^{+0.24}_{−0.27} 1.22^{+0.92}_{−0.53} - - 0.2 37.5 24 ≤12.4 - - - - - - - - - - - 1.4 ≤37.4 25 ≤2.4 - - - - - - - - - - - 1.3 ≤36.7 26 14.3±5.8 0.2±2.7 10.9±4.7 11.1±5.0 3.2±3.8 8.8±4.4 5.6±4.3 -0.33^{+0.34}_{−0.31} -0.84^{+0.46}_{−0.84} 0.46^{+0.53}_{−0.35} - - 0.3 37.4 27 ≤8.1 - - - - - - - - - - - 1.7 ≤37.2 28 ≤5.6 - - - - - - - - - - - 0.8 ≤37.1 29 23.6±6.8 1.0±2.9 8.4±4.3 9.4±4.7 14.2±5.4 8.1±4.3 16.9±5.8 0.29^{+0.23}_{−0.21} -0.53^{+0.38}_{−0.85} -0.19^{+0.22}_{−0.21} N N 0.7 37.6 30 ≤2.7 - - - - - - - - - - - 0.0 ≤36.7 31 93.8±11.1 20.4±5.8 53.1±8.5 73.6±9.8 20.2±5.9 62.1±9.0 31.7±7.0 -0.38^{+0.09}_{−0.10} -0.30^{+0.10}_{−0.13} 0.45^{+0.13}_{−0.11} N N 0.1 38.3 32 23.9±6.8 24.6±6.3 -2.1±1.9 22.5±6.3 1.4±3.4 7.8±4.4 1.1±3.4 -0.82^{+0.18}_{−0.18} 1.76^{+0.91}_{−0.54} -0.61^{+0.99}_{−1.15} N N 3.5 37.6 33 ≤2.2 - - - - - - - - - - - 0.0 ≤36.6 34 ≤2.6 - - - - - - - - - - - 0.0 ≤36.7 35 28.3±7.2 4.1±3.8 19.9±5.8 24.0±6.5 4.3±4.0 21.2±6.0 6.7±4.4 -0.59^{+0.19}_{−0.19} -0.54^{+0.27}_{−0.37} 0.62^{+0.40}_{−0.27} N N 0.9 37.7 36 ≤10.5 - - - - - - - - - - - 0.8 ≤37.3 37 8.8±5.0 1.5±2.9 8.5±4.3 10.1±4.7 -1.3±2.7 7.9±4.3 -0.6±2.9 -0.93^{+0.11}_{−0.07} -0.51^{+0.40}_{−0.64} 0.99^{+0.92}_{−0.53} - - 1.7 37.2 38 20.9±7.7 5.9±4.0 13.2±5.0 19.2±5.9 1.2±3.2 9.6±4.6 6.7±4.3 -0.25^{+0.29}_{−0.29} -0.24^{+0.21}_{−0.27} 0.80^{+0.78}_{−0.40} N N 0.7 37.6 39 24.3±6.2 8.5±4.1 11.5±4.6 20.0±5.7 4.3±3.4 16.3±5.2 7.2±4.0 -0.43^{+0.17}_{−0.20} -0.05^{+0.18}_{−0.19} 0.40^{+0.30}_{−0.21} N N 0.8 37.6 40 28.7±4.7 6.1±4.0 16.4±5.3 22.5±6.2 5.9±4.0 17.5±5.6 9.7±4.6 -0.34^{+0.18}_{−0.20} -0.32^{+0.21}_{−0.24} 0.43^{+0.27}_{−0.22} N N 0.8 37.7 41 154.7±13.8 23.1±6.2 96.0±10.9 119.1±12.2 35.6±7.3 95.4±11.0 52.4±8.5 -0.35^{+0.07}_{−0.08} -0.56^{+0.14}_{−0.07} 0.46^{+0.08}_{−0.09} N N 0.2 38.4 42 92.7±11.1 22.0±6.0 48.8±8.2 70.7±9.7 22.0±6.2 58.2±8.9 30.4±7.0 -0.37^{+0.09}_{−0.11} -0.23^{+0.10}_{−0.13} 0.36^{+0.13}_{−0.11} N N 0.0 38.2 43 42.1±8.2 9.7±4.6 19.0±5.8 28.7±6.9 13.4±5.2 25.1±6.5 14.7±5.4 -0.32^{+0.18}_{−0.15} -0.18^{+0.17}_{−0.22} 0.15^{+0.19}_{−0.15} N N 0.2 37.9 44 ≤11.8 - - - - - - - - - - - 0.9 ≤37.4 45 9.0±5.3 0.5±2.9 4.1±3.6 4.6±4.1 4.4±4.0 1.3±3.2 7.0±4.4 0.71^{+0.29}_{−0.23} -0.38^{+0.61}_{−0.84} 0.00^{+0.48}_{−0.46} - - 0.2 37.2 46 ≤14.5 - - - - - - - - - - - 0.2 ≤37.4 47 17.4±7.3 9.7±4.7 7.5±4.3 17.2±5.9 0.3±3.2 15.7±5.6 1.0±3.4 -0.92^{+0.09}_{−0.08} 0.19^{+0.27}_{−0.24} 0.69^{+0.91}_{−0.54} - - 2.2 37.5 48 9.4±5.8 4.1±3.8 5.8±4.0 9.8±5.0 -0.3±3.2 9.6±4.7 -1.0±3.2 -0.94^{+0.10}_{−0.06} -0.05^{+0.40}_{−0.43} 0.61^{+0.92}_{−0.53} - - 0.8 37.2

TABLE 6 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

49 ≤1.5 - - - - - - - - - - - 0.0 ≤36.5 50 34.0±7.6 7.2±4.1 22.6±6.1 29.8±6.9 4.2±4.0 28.1±6.6 5.6±4.3 -0.73^{+0.15}_{−0.15} -0.40^{+0.19}_{−0.22} 0.70^{+0.37}_{−0.30} N N 0.4 37.8 51 27.5±7.7 4.3±3.8 19.9±5.8 24.2±6.5 3.4±3.8 19.8±5.9 5.9±4.3 -0.62^{+0.20}_{−0.19} -0.54^{+0.27}_{−0.35} 0.70^{+0.51}_{−0.30} N N 3.2 37.7 52 ≤7.3 - - - - - - - - - - - 0.6 ≤37.1 53 15.3±6.6 0.7±3.2 8.5±4.4 9.3±5.0 5.5±4.3 4.0±4.0 8.8±4.8 0.38^{+0.35}_{−0.38} -0.53^{+0.38}_{−0.92} 0.19^{+0.37}_{−0.30} - - 0.5 37.4 54 17.6±7.4 2.6±3.6 12.2±5.0 14.8±5.7 1.6±3.6 14.6±5.4 4.0±4.1 -0.68^{+0.17}_{−0.22} -0.48^{+0.37}_{−0.57} 0.67^{+0.75}_{−0.40} - - 1.3 37.5 55 11.2±6.1 2.4±3.4 4.7±3.8 7.1±4.6 4.3±4.0 5.9±4.1 3.7±4.0 -0.36^{+0.37}_{−0.39} -0.13^{+0.51}_{−0.65} 0.05^{+0.49}_{−0.45} - - 0.9 37.3 56 20.7±6.9 5.7±4.3 13.4±5.2 19.1±6.3 1.6±3.6 13.8±5.6 5.1±4.3 -0.56^{+0.25}_{−0.26} -0.24^{+0.27}_{−0.35} 0.72^{+0.76}_{−0.40} N N 0.6 37.6 57 14.5±6.0 0.1±2.9 7.2±4.3 7.3±4.7 7.2±4.4 2.6±3.8 10.8±5.0 0.66^{+0.34}_{−0.19} -0.61^{+0.46}_{−0.92} 0.03^{+0.29}_{−0.30} - - 1.5 37.4 58 2.9±4.6 -0.3±2.9 4.5±3.8 4.2±4.3 -1.4±2.7 4.0±4.0 -1.9±2.7 -0.87^{+0.19}_{−0.13} -0.46^{+0.54}_{−0.99} 0.76^{+1.00}_{−0.61} - - 0.3 36.7 59 ≤1.5 - - - - - - - - - - - 0.0 ≤36.4 60 8.1±5.1 5.2±3.8 1.1±2.9 6.3±4.3 1.8±3.6 4.5±3.8 1.3±3.6 -0.61^{+0.27}_{−0.39} 0.54^{+0.77}_{−0.51} -0.13^{+0.91}_{−0.94} - - 1.0 37.2 61 9.9±6.1 5.0±4.0 7.9±4.4 12.9±5.4 -3.4±2.3 11.3±5.1 -2.9±2.7 -0.98^{+0.05}_{−0.02} -0.11^{+0.32}_{−0.35} 1.15^{+0.99}_{−0.54} - - 0.1 37.3 62 ≤3.7 - - - - - - - - - - - 0.0 ≤36.8 63 37.8±7.9 9.4±4.6 13.8±5.1 23.2±6.4 14.6±5.3 23.7±6.3 15.1±5.4 -0.28^{+0.17}_{−0.16} -0.07^{+0.20}_{−0.22} -0.05^{+0.23}_{−0.12} N N 0.8 37.8 64 ≤12.3 - - - - - - - - - - - 1.1 ≤37.3 65 31.8±7.1 12.6±4.8 13.9±5.0 26.4±6.5 5.4±3.8 22.1±6.0 7.1±4.1 -0.56^{+0.15}_{−0.18} 0.04^{+0.17}_{−0.17} 0.40^{+0.27}_{−0.21} N N 0.8 37.8 66 33.6±7.1 6.8±4.0 21.1±5.8 27.9±6.5 5.7±3.8 27.5±6.5 5.5±3.8 -0.70^{+0.11}_{−0.15} -0.38^{+0.19}_{−0.21} 0.56^{+0.24}_{−0.18} N N 1.8 37.8 67 31.5±7.4 -1.5±2.3 19.9±5.8 18.4±5.9 13.1±5.2 15.4±5.3 17.7±5.8 0.01^{+0.17}_{−0.21} -1.48^{+0.67}_{−0.81} 0.21^{+0.16}_{−0.18} N N 0.2 37.8 68 52.1±9.0 15.7±5.4 26.5±6.5 42.2±8.0 10.0±4.8 29.9±6.9 16.5±5.7 -0.35^{+0.14}_{−0.15} -0.11^{+0.13}_{−0.17} 0.44^{+0.19}_{−0.19} N N 0.4 38.0 69 28.3±7.1 3.7±3.6 20.2±5.8 24.0±6.4 4.3±4.0 18.4±5.7 8.1±4.6 -0.46^{+0.20}_{−0.20} -0.59^{+0.30}_{−0.38} 0.64^{+0.38}_{−0.29} N N 0.4 37.7 70 9.4±6.0 -0.5±3.2 8.8±4.7 8.2±5.2 1.2±3.6 4.4±4.4 4.2±4.3 -0.10^{+0.44}_{−0.54} -0.69^{+0.46}_{−0.99} 0.59^{+0.83}_{−0.46} - - 0.3 37.2 71 25.1±6.8 7.3±4.1 14.0±5.1 21.3±6.1 3.7±4.0 15.7±5.3 5.1±4.3 -0.61^{+0.23}_{−0.22} -0.19^{+0.22}_{−0.21} 0.54^{+0.48}_{−0.33} N P 0.2 37.7 72 50.4±8.6 11.4±4.7 35.0±7.1 46.4±8.1 4.0±3.8 39.4±7.5 9.7±4.7 -0.65^{+0.11}_{−0.13} -0.38^{+0.15}_{−0.16} 0.91^{+0.40}_{−0.27} N N 0.1 38.0 73 39.1±9.0 9.4±4.7 23.9±6.3 33.3±7.4 5.8±4.3 27.9±6.8 8.2±4.7 -0.60^{+0.16}_{−0.17} -0.29^{+0.16}_{−0.22} 0.59^{+0.32}_{−0.24} N N 0.9 37.8 74 8.5±6.0 4.3±3.8 3.3±3.6 7.6±4.7 1.0±3.4 4.1±4.0 1.4±3.6 -0.53^{+0.29}_{−0.47} 0.16^{+0.56}_{−0.51} 0.27^{+0.94}_{−0.67} - - 1.8 37.2 75 17.6±6.2 3.9±3.6 9.6±4.6 13.4±5.3 4.2±4.0 6.9±4.3 7.0±4.4 -0.07^{+0.35}_{−0.35} -0.27^{+0.32}_{−0.37} 0.35^{+0.40}_{−0.35} - - 1.7 37.5 76 85.6±10.9 24.8±6.5 46.9±8.1 71.6±9.9 14.0±5.3 62.5±9.3 19.6±6.0 -0.57^{+0.09}_{−0.10} -0.24^{+0.17}_{−0.06} 0.56^{+0.14}_{−0.16} N N 1.5 38.2 77 ≤2.4 - - - - - - - - - - - 0.0 ≤36.6 78 55.9±9.1 10.4±4.7 29.2±6.7 39.6±7.8 16.3±5.6 34.1±7.1 20.2±6.1 -0.32^{+0.13}_{−0.14} -0.34^{+0.16}_{−0.19} 0.27^{+0.15}_{−0.14} N N 0.3 38.0 79 ≤16.5 - - - - - - - - - - - 2.4 ≤37.5 80 18.1±7.5 2.3±3.8 14.4±5.3 16.7±6.1 0.7±3.4 15.6±5.8 2.2±3.8 -0.85^{+0.12}_{−0.15} -0.56^{+0.37}_{−0.67} 0.86^{+0.83}_{−0.43} - - 0.7 37.5 81 20.8±7.2 4.8±4.5 3.0±4.0 7.8±5.5 13.0±5.1 8.2±5.3 13.4±5.2 0.22^{+0.28}_{−0.37} 0.30^{+0.72}_{−0.72} -0.51^{+0.41}_{−0.59} - - 0.8 37.6 82 2.9±6.1 3.8±4.1 3.0±3.8 6.8±5.1 -4.1±2.3 4.9±4.6 -3.8±2.7 -0.91^{+0.15}_{−0.09} 0.16^{+0.73}_{−0.70} 0.76^{+1.07}_{−0.84} - - 0.4 36.7 83 ≤1.5 - - - - - - - - - - - 0.0 ≤36.4 84 52.2±8.5 7.5±4.1 29.1±6.5 36.5±7.3 15.6±5.2 33.2±7.0 18.4±5.6 -0.35^{+0.14}_{−0.12} -0.49^{+0.19}_{−0.20} 0.28^{+0.17}_{−0.11} N N 2.0 38.0 85 36.4±7.4 7.7±4.1 23.9±6.1 31.6±6.9 4.8±3.6 29.1±6.6 5.6±3.8 -0.71^{+0.11}_{−0.14} -0.38^{+0.17}_{−0.21} 0.70^{+0.24}_{−0.24} N N 0.3 37.8 86 ≤15.6 - - - - - - - - - - - 1.4 ≤37.4 87 18.3±4.3 0.9±2.9 11.1±4.7 12.0±5.1 6.8±4.3 9.8±4.6 8.2±4.6 -0.16^{+0.27}_{−0.28} -0.69^{+0.38}_{−0.84} 0.21^{+0.27}_{−0.24} N N 0.2 37.5 88 31.4±9.8 2.9±4.7 20.7±6.2 23.5±7.3 8.2±4.8 20.0±6.9 10.9±5.2 -0.36^{+0.20}_{−0.24} -0.59^{+0.38}_{−0.70} 0.40^{+0.27}_{−0.21} - - 1.8 37.8 89 ≤0.8 - - - - - - - - - - - 0.0 ≤36.2 90 ≤9.9 - - - - - - - - - - - 1.1 ≤37.3 91 ≤2.7 - - - - - - - - - - - 0.0 ≤36.7 92 ≤1.1 - - - - - - - - - - - 0.0 ≤36.3 93 ≤11.7 - - - - - - - - - - - 0.9 ≤37.3 94 16.1±3.8 0.1±2.7 9.4±4.4 9.6±4.7 6.1±4.1 9.0±4.4 7.6±4.4 -0.16^{+0.28}_{−0.29} -0.76^{+0.45}_{−0.84} 0.21^{+0.27}_{−0.26} N N 0.6 37.5 95 ≤2.4 - - - - - - - - - - - 0.0 ≤36.6 96 223.3±16.4 49.1±8.3 126.6±12.4 175.8±14.6 47.5±8.3 143.6±13.2 72.1±9.8 -0.39^{+0.06}_{−0.07} -0.31^{+0.06}_{−0.09} 0.45^{+0.08}_{−0.07} N N 0.7 38.6 97 7.6±5.1 2.2±3.2 2.7±3.4 4.9±4.1 2.7±3.8 3.3±3.6 4.1±4.1 0.02^{+0.54}_{−0.49} 0.03^{+0.67}_{−0.70} 0.00^{+0.78}_{−0.70} - - 0.7 37.1

TABLE 6 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

98 72.7±10.1 6.6±4.3 45.2±8.0 51.8±8.7 20.9±5.9 40.7±7.9 30.5±6.8 -0.21^{+0.11}_{−0.13} -0.73^{+0.21}_{−0.27} 0.38^{+0.11}_{−0.13} N N 0.3 38.1 99 44.1±8.6 6.5±4.6 25.7±6.6 32.2±7.6 11.8±4.8 30.8±7.3 11.6±4.9 -0.50^{+0.13}_{−0.16} -0.48^{+0.24}_{−0.32} 0.36^{+0.17}_{−0.16} N N 2.6 37.9 100 27.9±7.8 8.6±4.8 14.6±5.5 23.3±6.8 4.6±4.2 17.3±6.1 8.9±4.9 -0.40^{+0.24}_{−0.24} -0.13^{+0.24}_{−0.25} 0.46^{+0.45}_{−0.30} N N 2.4 37.7 101 31.1±7.5 4.5±4.1 21.3±6.1 25.7±6.9 5.4±3.8 18.8±6.2 8.1±4.3 -0.45^{+0.17}_{−0.21} -0.54^{+0.30}_{−0.40} 0.59^{+0.27}_{−0.21} N N 2.0 37.7 102 ≤13.3 - - - - - - - - - - - 1.4 ≤37.4 103 33.0±7.7 7.3±4.3 20.9±6.0 28.3±6.9 4.7±4.1 26.0±6.5 4.1±4.1 -0.80^{+0.09}_{−0.14} -0.35^{+0.19}_{−0.24} 0.62^{+0.40}_{−0.27} N N 1.0 37.8 104 22.2±6.6 9.2±4.7 8.2±4.4 17.4±6.0 4.7±3.6 15.3±5.7 5.6±3.8 -0.52^{+0.19}_{−0.22} 0.13^{+0.25}_{−0.26} 0.24^{+0.32}_{−0.27} N N 0.6 37.6 105 39.3±13.3 26.5±8.8 6.8±8.4 33.3±11.7 6.0±5.4 30.4±11.0 6.2±5.9 -0.74^{+0.12}_{−0.26} 0.47^{+0.72}_{−0.32} 0.15^{+0.68}_{−0.86} N P 1.1 37.8 106 ≤46.3 - - - - - - - - - - - 0.3 ≤37.9 107 ≤12.9 - - - - - - - - - - - 1.1 ≤37.4 108 22.0±6.8 2.3±3.4 15.7±5.3 18.0±5.9 4.1±4.1 17.0±5.6 5.4±4.4 -0.61^{+0.22}_{−0.22} -0.62^{+0.35}_{−0.61} 0.54^{+0.48}_{−0.30} N N 0.3 37.6 109 30.1±8.9 12.0±5.4 10.3±5.1 22.3±6.9 7.6±4.9 17.2±6.1 9.5±5.3 -0.37^{+0.28}_{−0.23} 0.14^{+0.26}_{−0.25} 0.13^{+0.35}_{−0.29} - - 2.5 37.7 110 20.4±7.6 4.2±4.5 14.0±5.6 18.2±6.7 2.2±3.9 14.9±6.1 4.7±4.3 -0.63^{+0.20}_{−0.25} -0.35^{+0.35}_{−0.56} 0.67^{+0.70}_{−0.40} - - 2.2 37.6 111 11.0±6.3 2.8±4.0 10.3±5.0 13.0±5.9 -2.0±3.0 11.8±5.6 -1.5±3.2 -0.96^{+0.08}_{−0.04} -0.38^{+0.41}_{−0.64} 1.07^{+0.92}_{−0.54} - - 1.6 37.3 112 ≤3.5 - - - - - - - - - - - 0.0 ≤36.8 113 ≤1.7 - - - - - - - - - - - 0.0 ≤36.5 114 57.8±13.4 19.2±7.0 29.6±8.1 48.8±10.3 9.5±5.1 43.3±9.8 9.4±5.2 -0.69^{+0.15}_{−0.13} -0.11^{+0.17}_{−0.19} 0.50^{+0.25}_{−0.21} N N 1.3 38.0 115 ≤5.1 - - - - - - - - - - - 1.6 ≤37.0 116 ≤28.3 - - - - - - - - - - - 1.4 ≤37.7 117 8782.9±95.2 3338.2±59.1 4502.8±68.4 7841.1±89.9 941.9±31.9 6832.4±84.01361.1±38.1 -0.70^{+0.00}_{−0.01} -0.05^{+0.01}_{−0.01} 0.71^{+0.01}_{−0.02} N Y 42.9 40.2 118 101.1±11.7 20.2±6.1 55.1±8.7 75.3±10.2 25.7±6.4 63.0±9.4 31.2±6.9 -0.39^{+0.09}_{−0.10} -0.34^{+0.12}_{−0.13} 0.33^{+0.15}_{−0.06} N N 0.1 38.3 119 330.3±20.9 53.4±9.9 168.9±15.1 222.3±17.6 108.0±11.7 196.2±16.6 125.9±12.6 -0.28^{+0.05}_{−0.06} -0.43^{+0.10}_{−0.07} 0.22^{+0.06}_{−0.05} N N 0.4 38.8 120 107.7±14.5 28.1±8.4 54.7±10.3 82.8±12.8 24.9±6.8 70.5±12.1 32.5±7.6 -0.43^{+0.10}_{−0.11} -0.20^{+0.13}_{−0.17} 0.35^{+0.15}_{−0.11} N N 0.9 38.3 121 ≤5.3 - - - - - - - - - - - 0.0 ≤37.0 122 ≤10.8 - - - - - - - - - - - 1.2 ≤37.3 123 ≤253.6 - - - - - - - - - - - 6.8 ≤38.7 124 39.7±8.6 13.7±5.7 23.5±6.6 37.2±8.2 2.6±3.4 31.7±7.7 6.2±4.1 -0.72^{+0.12}_{−0.14} -0.18^{+0.22}_{−0.15} 0.89^{+0.54}_{−0.35} N N 0.1 37.9 125 16.2±7.5 2.4±3.6 10.0±4.8 12.4±5.6 3.6±4.0 11.4±5.2 5.3±4.3 -0.47^{+0.30}_{−0.29} -0.40^{+0.40}_{−0.65} 0.40^{+0.51}_{−0.37} - - 0.8 37.5 126 ≤16.1 - - - - - - - - - - - 1.4 ≤37.5 127 24.6±8.1 7.8±4.9 12.9±5.8 20.7±7.1 3.9±4.2 19.9±6.8 3.8±4.4 -0.78^{+0.12}_{−0.22} -0.11^{+0.30}_{−0.35} 0.46^{+0.56}_{−0.38} - - 1.8 37.6 128 ≤33.0 - - - - - - - - - - - 1.0 ≤37.8 129 ≤16.7 - - - - - - - - - - - 1.0 ≤37.5 130 ≤19.4 - - - - - - - - - - - 1.6 ≤37.5 131 ≤10.5 - - - - - - - - - - - 1.1 ≤37.3 132 51.1±10.8 23.7±7.4 14.5±6.8 38.2±9.6 12.9±5.2 32.7±9.1 16.3±5.7 -0.39^{+0.13}_{−0.19} 0.24^{+0.30}_{−0.18} 0.06^{+0.29}_{−0.23} N N 0.4 38.0 133 75.5±10.2 14.7±5.2 39.1±7.5 53.8±8.7 21.7±6.2 49.3±8.3 26.2±6.6 -0.37^{+0.10}_{−0.12} -0.31^{+0.12}_{−0.16} 0.27^{+0.14}_{−0.11} N N 0.0 38.2 134 ≤15.8 - - - - - - - - - - - 1.8 ≤37.5 135 ≤27.1 - - - - - - - - - - - 0.2 ≤37.7 136 9.7±6.6 0.9±3.2 9.7±4.7 10.6±5.2 -0.4±3.2 9.5±4.8 0.2±3.4 -0.89^{+0.13}_{−0.11} -0.61^{+0.46}_{−0.77} 0.84^{+0.92}_{−0.46} - - 1.3 37.2 137 25.5±9.5 12.0±6.2 11.7±6.6 23.7±8.6 1.8±3.9 25.6±8.4 2.1±4.3 -0.91^{+0.09}_{−0.09} 0.09^{+0.40}_{−0.37} 0.70^{+0.77}_{−0.61} - - 0.0 37.7 138 ≤34.2 - - - - - - - - - - - 1.9 ≤37.8 139 ≤13.4 - - - - - - - - - - - 1.9 ≤37.4 140 80.6±10.8 25.6±6.6 43.3±8.0 69.0±9.9 11.6±5.1 54.6±8.9 19.7±6.1 -0.52^{+0.11}_{−0.10} -0.11^{+0.09}_{−0.14} 0.58^{+0.19}_{−0.15} N N 2.1 38.2 141 13.8±6.0 4.5±4.0 6.1±4.1 10.7±5.2 3.2±3.8 10.2±5.0 4.6±4.1 -0.49^{+0.29}_{−0.31} -0.03^{+0.38}_{−0.43} 0.27^{+0.56}_{−0.46} - - 1.4 37.4 142 14.6±5.8 3.4±3.4 4.9±3.8 8.3±4.6 6.3±4.3 8.6±4.4 5.8±4.3 -0.31^{+0.33}_{−0.31} -0.03^{+0.41}_{−0.45} -0.05^{+0.34}_{−0.38} - - 1.2 37.4 143 28.4±7.1 -0.7±2.3 10.1±4.6 9.5±4.7 18.9±5.9 8.5±4.4 20.7±6.1 0.37^{+0.21}_{−0.19} -0.99^{+0.46}_{−1.00} -0.23^{+0.17}_{−0.19} N P 0.8 37.7 144 5.9±5.0 5.6±4.0 2.2±3.4 7.8±4.7 -1.9±2.7 6.2±4.3 -0.4±3.2 -0.87^{+0.18}_{−0.13} 0.40^{+0.65}_{−0.48} 0.53^{+1.07}_{−0.84} - - 0.5 37.0 145 ≤23.9 - - - - - - - - - - - 0.1 ≤37.6 146 165.6±14.5 40.6±7.9 93.4±11.0 134.0±13.1 31.6±6.9 118.5±12.4 44.3±7.9 -0.51^{+0.07}_{−0.07} -0.27^{+0.08}_{−0.09} 0.50^{+0.10}_{−0.08} N N 3.6 38.5 147 84.9±10.6 26.4±6.5 45.4±8.0 71.9±9.8 13.0±4.8 66.3±9.5 16.9±5.3 -0.63^{+0.07}_{−0.10} -0.13^{+0.10}_{−0.12} 0.57^{+0.13}_{−0.15} N N 0.6 38.2

TABLE 6 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

148 62.3±9.7 15.9±5.5 30.3±6.9 46.2±8.3 16.2±5.6 38.7±7.7 21.5±6.2 -0.35^{+0.12}_{−0.14} -0.17^{+0.13}_{−0.17} 0.32^{+0.12}_{−0.18} N N 0.2 38.0 149 44.9±8.2 21.4±6.0 19.6±5.8 41.0±7.8 3.9±3.4 37.4±7.5 5.8±3.8 -0.76^{+0.09}_{−0.11} 0.11^{+0.18}_{−0.11} 0.63^{+0.35}_{−0.21} N N 5.1 37.9 150 ≤8.5 - - - - - - - - - - - 1.1 ≤37.2 151 4.2±4.6 -0.2±2.7 5.9±4.0 5.8±4.3 -1.6±2.7 6.4±4.1 -1.0±2.9 -0.91^{+0.13}_{−0.09} -0.61^{+0.53}_{−0.92} 0.84^{+0.99}_{−0.53} - - 0.6 36.9 152 ≤3.5 - - - - - - - - - - - 0.5 ≤36.8 153 ≤22.5 - - - - - - - - - - - 1.3 ≤37.6 154 67.1±9.5 15.1±5.2 31.8±6.9 46.9±8.2 20.2±5.7 41.6±7.8 22.1±5.9 -0.37^{+0.11}_{−0.12} -0.22^{+0.14}_{−0.15} 0.22^{+0.14}_{−0.11} N N 0.5 38.1 155 41.3±8.2 15.2±5.3 18.9±5.8 34.0±7.4 7.3±4.4 32.6±7.1 7.8±4.6 -0.66^{+0.13}_{−0.15} -0.02^{+0.19}_{−0.13} 0.44^{+0.23}_{−0.25} N N 0.5 37.9 156 50.5±9.0 11.6±5.0 34.1±7.2 45.7±8.3 4.8±4.1 36.9±7.6 11.3±5.1 -0.58^{+0.12}_{−0.14} -0.37^{+0.16}_{−0.17} 0.80^{+0.41}_{−0.24} N N 5.0 38.0 157 68.2±10.1 16.1±5.6 37.0±7.5 53.1±8.9 15.1±5.5 46.9±8.4 18.5±5.9 -0.49^{+0.11}_{−0.12} -0.25^{+0.11}_{−0.18} 0.42^{+0.14}_{−0.16} N N 0.2 38.1 158 235.4±21.2 41.2±7.8 159.7±13.9 200.9±15.6 35.0±7.3 175.2±14.6 54.1±8.7 -0.58^{+0.06}_{−0.05} -0.50^{+0.07}_{−0.08} 0.69^{+0.09}_{−0.08} N P 1.6 38.6 159 ≤1.6 - - - - - - - - - - - 0.0 ≤36.5 160 13.4±6.1 3.6±3.8 6.9±4.4 10.6±5.3 2.9±3.8 6.9±4.7 4.4±4.1 -0.33^{+0.37}_{−0.43} -0.16^{+0.43}_{−0.51} 0.32^{+0.62}_{−0.45} - - 0.0 37.4 161 ≤6.6 - - - - - - - - - - - 0.0 ≤37.1 162 ≤7.4 - - - - - - - - - - - 1.4 ≤37.1 163 134.7±16.7 21.3±6.2 77.5±10.1 98.8±11.4 36.1±7.4 82.0±10.5 47.3±8.3 -0.33^{+0.07}_{−0.10} -0.47^{+0.12}_{−0.11} 0.36^{+0.10}_{−0.08} N N 1.5 38.4 164 11.3±5.5 3.2±3.4 5.5±4.0 8.7±4.7 2.6±3.6 9.0±4.6 2.0±3.6 -0.75^{+0.17}_{−0.25} -0.11^{+0.40}_{−0.48} 0.27^{+0.64}_{−0.46} - - 1.2 37.3 165 17.2±6.3 9.7±4.7 6.1±4.1 15.8±5.8 1.4±3.4 14.4±5.4 0.8±3.4 -0.92^{+0.10}_{−0.08} 0.27^{+0.29}_{−0.27} 0.46^{+0.80}_{−0.49} - - 0.2 37.5 166 32.8±7.8 9.4±4.7 12.5±5.1 21.8±6.5 11.0±5.0 18.5±6.0 11.4±5.1 -0.30^{+0.19}_{−0.21} 0.01^{+0.19}_{−0.27} 0.06^{+0.24}_{−0.19} N N 0.7 37.8 167 ≤12.6 - - - - - - - - - - - 0.5 ≤37.4 168 ≤5.7 - - - - - - - - - - - 0.7 ≤37.0 169 21.9±6.7 7.6±4.3 10.3±4.7 17.9±5.9 3.9±4.0 18.5±5.8 3.3±4.0 -0.80^{+0.11}_{−0.09} -0.05^{+0.24}_{−0.24} 0.38^{+0.48}_{−0.33} N N 1.8 37.6 170 23.1±6.8 6.4±4.1 11.4±4.8 17.8±5.9 5.3±4.1 17.3±5.7 4.8±4.1 -0.65^{+0.20}_{−0.21} -0.13^{+0.24}_{−0.27} 0.32^{+0.35}_{−0.27} N N 1.2 37.6 171 10.0±5.4 3.0±3.4 6.4±4.1 9.4±4.8 0.6±3.2 9.0±4.6 1.0±3.4 -0.85^{+0.15}_{−0.15} -0.19^{+0.40}_{−0.51} 0.61^{+0.84}_{−0.53} - - 0.0 37.3 172 ≤5.8 - - - - - - - - - - - 0.0 ≤37.0 173 ≤4.5 - - - - - - - - - - - 0.5 ≤36.9 174 14.7±7.6 4.2±3.8 9.5±4.7 13.7±5.6 0.5±3.2 11.2±5.1 1.9±3.6 -0.82^{+0.15}_{−0.18} -0.24^{+0.35}_{−0.38} 0.76^{+0.84}_{−0.45} - - 1.8 37.4 175 7.5±5.3 2.8±3.6 7.2±4.3 9.9±5.1 -2.5±2.3 9.9±4.8 -2.2±2.7 -0.97^{+0.06}_{−0.03} -0.24^{+0.40}_{−0.59} 1.07^{+0.99}_{−0.54} - - 1.2 37.1 176 5.0±4.8 -0.9±2.3 2.7±3.4 1.9±3.6 3.1±3.8 0.0±2.9 5.8±4.3 0.79^{+0.21}_{−0.22} -0.53^{+0.76}_{−1.07} -0.03^{+0.70}_{−0.67} - - 0.7 37.0 177 5.3±3.8 2.5±2.9 1.4±2.7 4.0±3.4 1.4±2.7 3.2±3.2 1.3±2.7 -0.54^{+0.25}_{−0.46} 0.27^{+0.62}_{−0.54} 0.05^{+0.73}_{−0.72} - - 0.5 37.0 178 ≤2.1 - - - - - - - - - - - 0.0 ≤36.6 179 21.8±8.4 5.7±4.1 10.6±4.8 16.3±5.9 5.8±4.1 14.7±5.6 5.2±4.1 -0.56^{+0.23}_{−0.24} -0.16^{+0.27}_{−0.32} 0.27^{+0.32}_{−0.27} N N 1.4 37.6 180 ≤4.7 - - - - - - - - - - - 0.0 ≤36.9 181 10.2±5.6 0.0±2.9 7.6±4.4 7.6±4.8 2.5±3.6 8.2±4.7 2.2±3.6 -0.70^{+0.19}_{−0.30} -0.61^{+0.46}_{−0.92} 0.40^{+0.65}_{−0.43} - - 0.8 37.3 182 16.6±7.6 1.3±3.4 12.0±5.1 13.3±5.7 3.4±3.8 11.2±5.2 4.8±4.1 -0.50^{+0.28}_{−0.30} -0.61^{+0.38}_{−0.77} 0.51^{+0.51}_{−0.35} - - 0.9 37.5 183 ≤10.8 - - - - - - - - - - - 1.6 ≤37.3 184 229.4±16.5 50.3±8.3 123.7±12.3 174.0±14.4 55.5±8.7 143.8±13.2 77.9±10.1 -0.36^{+0.07}_{−0.06} -0.29^{+0.06}_{−0.09} 0.38^{+0.07}_{−0.07} N N 0.9 38.7 185 152.0±16.1 29.8±6.8 90.4±10.7 120.2±12.3 31.6±7.0 107.0±11.6 46.9±8.2 -0.45^{+0.07}_{−0.07} -0.39^{+0.10}_{−0.09} 0.49^{+0.09}_{−0.09} N N 0.4 38.5 186 8.3±5.8 -0.1±2.7 7.1±4.3 7.0±4.6 1.1±3.4 9.2±4.7 0.7±3.4 -0.87^{+0.15}_{−0.13} -0.69^{+0.54}_{−0.91} 0.54^{+0.83}_{−0.46} - - 1.5 37.2 187 26.1±6.9 3.6±3.6 17.0±5.4 20.5±6.1 5.6±4.1 16.7±5.6 9.3±4.7 -0.36^{+0.21}_{−0.21} -0.54^{+0.33}_{−0.40} 0.48^{+0.30}_{−0.24} N N 1.4 37.7 188 ≤6.7 - - - - - - - - - - - 0.0 ≤37.1 189 32.2±8.2 8.8±4.6 18.3±5.7 27.1±6.8 5.6±4.1 24.7±6.5 5.2±4.1 -0.72^{+0.16}_{−0.16} -0.21^{+0.18}_{−0.22} 0.51^{+0.29}_{−0.24} N N 0.2 37.8 190 35.8±7.7 6.2±4.0 26.7±6.5 32.9±7.1 3.0±3.8 30.9±6.9 4.6±4.1 -0.81^{+0.11}_{−0.13} -0.51^{+0.19}_{−0.24} 0.86^{+0.56}_{−0.32} N N 0.1 37.8 191 21.6±6.6 6.4±4.1 10.4±4.7 16.8±5.8 4.8±4.0 13.0±5.2 6.5±4.3 -0.41^{+0.25}_{−0.26} -0.11^{+0.27}_{−0.27} 0.32^{+0.38}_{−0.29} N N 0.7 37.6 192 ≤1.4 - - - - - - - - - - - 1.5 ≤36.4 193 8.1±5.2 2.5±3.4 0.8±2.9 3.2±4.0 4.8±4.0 2.3±3.6 4.6±4.0 0.33^{+0.39}_{−0.28} 0.31^{+0.91}_{−0.77} -0.46^{+0.61}_{−0.84} - - 0.7 37.2 194 119.6±13.3 35.8±7.2 66.6±9.4 102.4±11.4 17.5±5.7 90.6±10.7 24.0±6.4 -0.63^{+0.07}_{−0.07} -0.15^{+0.07}_{−0.12} 0.59^{+0.15}_{−0.10} N P 2.1 38.3 195 28.9±7.2 6.0±4.0 12.9±5.0 18.9±5.9 10.0±4.8 15.4±5.3 12.6±5.2 -0.17^{+0.19}_{−0.22} -0.21^{+0.21}_{−0.27} 0.13^{+0.23}_{−0.20} N N 1.0 37.7 196 ≤11.4 - - - - - - - - - - - 0.9 ≤37.3

TABLE 6 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

197 13.2±5.7 1.9±3.2 9.5±4.6 11.4±5.1 1.8±3.4 6.6±4.3 6.3±4.3 -0.10^{+0.36}_{−0.37} -0.48^{+0.40}_{−0.62} 0.59^{+0.70}_{−0.43} - - 0.3 37.4 198 ≤5.9 - - - - - - - - - - - 0.0 ≤37.0 199 9.6±5.3 -0.2±2.7 8.0±4.3 7.9±4.6 1.7±3.4 7.9±4.4 2.4±3.6 -0.67^{+0.19}_{−0.33} -0.76^{+0.45}_{−0.92} 0.54^{+0.72}_{−0.43} - - 1.3 37.3 200 ≤6.2 - - - - - - - - - - - 0.0 ≤37.1 201 18.0±6.2 2.7±3.4 6.0±4.0 8.7±4.7 9.3±4.7 6.2±4.1 10.7±5.0 0.21^{+0.30}_{−0.30} -0.19^{+0.40}_{−0.56} -0.13^{+0.26}_{−0.30} - - 1.3 37.5 202 27.1±6.9 4.0±3.4 18.0±5.6 22.0±6.1 5.0±4.1 17.9±5.6 7.5±4.6 -0.48^{+0.21}_{−0.21} -0.54^{+0.27}_{−0.26} 0.54^{+0.35}_{−0.27} N N 1.1 37.7 203 14.2±5.9 6.2±4.0 9.2±4.4 15.5±5.4 -1.2±3.2 14.6±5.2 -0.6±3.4 -0.96^{+0.08}_{−0.04} -0.08^{+0.24}_{−0.27} 0.92^{+0.91}_{−0.54} - - 0.1 37.4 204 ≤1.7 - - - - - - - - - - - 17.4 ≤36.5 205 12.8±5.7 1.2±2.9 8.9±4.4 10.1±4.8 2.7±3.8 10.4±4.7 3.1±4.0 -0.68^{+0.16}_{−0.14} -0.61^{+0.46}_{−0.69} 0.43^{+0.64}_{−0.38} - - 1.0 37.4 206 ≤4.6 - - - - - - - - - - - 0.0 ≤36.9 207 ≤4.2 - - - - - - - - - - - 0.0 ≤36.9 208 9.8±5.4 -0.5±2.3 9.6±4.6 9.0±4.7 0.8±3.4 10.1±4.7 0.2±3.4 -0.90^{+0.12}_{−0.10} -0.99^{+0.53}_{−0.92} 0.70^{+0.83}_{−0.46} - - 0.9 37.2 209 39.8±8.0 1.9±3.2 20.9±5.9 22.9±6.3 17.0±5.7 19.3±5.8 20.6±6.1 -0.04^{+0.16}_{−0.18} -0.86^{+0.44}_{−0.53} 0.09^{+0.19}_{−0.11} N N 0.0 37.9 210 11.6±5.5 1.5±2.9 8.0±4.3 9.5±4.7 2.1±3.6 8.6±4.4 2.7±3.8 -0.66^{+0.18}_{−0.34} -0.48^{+0.43}_{−0.65} 0.46^{+0.67}_{−0.43} - - 0.0 37.3 211 15.4±5.9 -1.8±1.9 10.8±4.7 9.0±4.7 6.4±4.3 8.9±4.6 7.0±4.4 -0.21^{+0.30}_{−0.31} -1.30^{+0.61}_{−0.92} 0.24^{+0.30}_{−0.24} - - 0.0 37.4 212 ≤2.9 - - - - - - - - - - - 0.0 ≤36.7 213 25.2±7.5 7.4±4.1 8.1±4.3 15.5±5.4 9.4±4.8 15.9±5.3 9.8±5.0 -0.31^{+0.22}_{−0.21} 0.05^{+0.24}_{−0.24} -0.03^{+0.24}_{−0.24} N N 1.0 37.7 214 ≤11.6 - - - - - - - - - - - 1.6 ≤37.3 215 ≤11.5 - - - - - - - - - - - 1.4 ≤37.3 216 25.3±6.8 2.6±3.2 15.3±5.2 18.0±5.7 7.3±4.4 16.7±5.4 8.1±4.6 -0.42^{+0.20}_{−0.22} -0.59^{+0.30}_{−0.46} 0.32^{+0.27}_{−0.21} N N 0.0 37.7 217 14.7±6.4 3.1±3.4 11.8±4.8 14.8±5.4 0.9±3.4 13.3±5.1 2.1±3.8 -0.83^{+0.14}_{−0.17} -0.43^{+0.32}_{−0.46} 0.75^{+0.81}_{−0.43} - - 1.6 37.4 218 ≤4.8 - - - - - - - - - - - 0.0 ≤36.9 219 6.8±4.9 -0.6±2.3 4.9±3.8 4.2±4.0 2.6±3.6 4.2±3.8 3.2±3.8 -0.26^{+0.37}_{−0.48} -0.69^{+0.54}_{−0.99} 0.24^{+0.65}_{−0.48} - - 1.0 37.1 220 102.5±11.5 31.7±6.8 52.0±8.4 83.6±10.4 18.9±5.8 72.6±9.7 25.4±6.5 -0.55^{+0.08}_{−0.09} -0.10^{+0.11}_{−0.09} 0.48^{+0.13}_{−0.12} N N 2.8 38.3 221 ≤4.1 - - - - - - - - - - - 0.0 ≤36.9 222 ≤1.3 - - - - - - - - - - - 0.0 ≤36.4 223 14.1±5.8 0.1±2.7 5.7±4.0 5.9±4.3 8.2±4.6 7.7±4.3 7.3±4.6 -0.12^{+0.34}_{−0.31} -0.61^{+0.53}_{−0.92} -0.11^{+0.30}_{−0.29} - - 1.0 37.4 224 6.6±4.9 2.8±3.2 3.1±3.4 5.9±4.1 0.7±3.4 5.0±3.8 0.2±3.4 -0.78^{+0.22}_{−0.22} 0.03^{+0.56}_{−0.54} 0.27^{+0.94}_{−0.65} - - 1.7 37.1 225 43.5±8.3 13.9±5.1 14.5±5.2 28.5±6.8 15.0±5.4 24.8±6.4 16.6±5.7 -0.26^{+0.15}_{−0.17} 0.12^{+0.14}_{−0.21} 0.00^{+0.20}_{−0.15} N N 0.1 37.9 226 11.4±5.4 3.3±3.4 5.4±3.8 8.7±4.6 2.7±3.6 9.1±4.4 2.3±3.6 -0.73^{+0.17}_{−0.27} -0.11^{+0.40}_{−0.43} 0.24^{+0.62}_{−0.43} - - 1.5 37.3 227 97.4±11.7 13.4±5.0 49.5±8.3 62.9±9.2 33.6±7.1 54.8±8.7 42.0±7.8 -0.20^{+0.11}_{−0.10} -0.46^{+0.12}_{−0.16} 0.20^{+0.11}_{−0.09} N Y 0.1 38.2 228 43.3±8.6 7.9±4.3 25.3±6.4 33.3±7.2 10.7±4.8 31.4±7.0 12.2±5.1 -0.50^{+0.13}_{−0.15} -0.40^{+0.19}_{−0.19} 0.39^{+0.19}_{−0.17} N N 0.2 37.9 229 32.4±7.4 10.2±4.6 11.8±4.8 22.0±6.2 10.4±4.8 21.8±6.1 11.0±5.0 -0.39^{+0.17}_{−0.19} 0.03^{+0.18}_{−0.22} 0.08^{+0.21}_{−0.21} N N 0.3 37.8 230 40.7±8.0 4.4±3.6 27.7±6.5 32.1±7.1 8.6±4.6 27.2±6.5 13.1±5.2 -0.41^{+0.16}_{−0.14} -0.67^{+0.24}_{−0.27} 0.51^{+0.21}_{−0.16} N N 1.7 37.9 231 30.8±7.9 6.5±4.0 18.1±5.6 24.6±6.4 5.8±4.1 20.8±5.9 7.2±4.4 -0.55^{+0.18}_{−0.19} -0.35^{+0.22}_{−0.21} 0.48^{+0.30}_{−0.24} N N 0.3 37.7 232 ≤5.7 - - - - - - - - - - - 0.0 ≤37.0 233 13.8±6.1 2.4±3.2 11.4±4.7 13.8±5.2 1.1±3.2 13.9±5.1 0.7±3.2 -0.93^{+0.10}_{−0.07} -0.51^{+0.38}_{−0.48} 0.75^{+0.78}_{−0.43} - - 0.1 37.4 234 ≤12.9 - - - - - - - - - - - 1.5 ≤37.4 235 6.6±4.8 2.2±3.2 3.3±3.4 5.5±4.1 1.0±3.2 2.4±3.4 1.7±3.4 -0.24^{+0.25}_{−0.76} -0.05^{+0.56}_{−0.67} 0.29^{+0.89}_{−0.61} - - 0.2 37.1 236 ≤4.6 - - - - - - - - - - - 0.0 ≤36.9

NOTE. — Col. (1): Master ID, cols. (2)−(8): net counts, in each of the 7 energy bands (see Table 2 for definitions of these bands), col. (9): hardness ratio, cols. (10) and (11) color values, errors are given as 1σ, cols. (12) and (13): short-term variability, where (BB) indicate Bayesian block analysis and (K-S) indicates the Kolmogorov-Smirnov test, in both columns symbols indicate - (N) non-variable in all observations, (V) variable in at least one observation, (P) possible variability in at least one observation, col. (14): the significance of the change in L_X between the previous observation and the current observation respectively (equation 2), col. (15): log L_X (0.3−8.0 keV). Upper limit values of net B and L_X are at the 68% confidence level.

TABLE 7 SOURCE COUNTS, HARDNESS RATIOS, COLOR-COLOR VALUES AND VARIABILITY: OBSERVATION 3

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

1 22.5±6.2 0.1±2.3 11.1±4.6 11.2±4.7 11.3±4.7 8.3±4.1 14.8±5.2 0.14^{+0.22}_{−0.22} -0.84^{+0.46}_{−0.92} 0.06^{+0.18}_{−0.19} N N 1.4 38.0 2 37.1±7.5 3.3±3.2 20.1±5.7 23.4±6.1 13.7±5.1 19.9±5.7 16.4±5.4 -0.24^{+0.16}_{−0.17} -0.55^{+0.29}_{−0.29} 0.21^{+0.20}_{−0.12} N N 1.4 38.3 3 ≤1.4 - - - - - - - - - - - 0.0 ≤36.8 4 36.6±7.5 10.5±4.4 21.9±5.9 32.4±6.9 4.2±3.8 32.1±6.8 3.7±3.8 -0.87^{+0.07}_{−0.09} -0.11^{+0.15}_{−0.17} 0.72^{+0.35}_{−0.26} N N 1.0 38.2 5 64.5±9.3 17.5±5.3 34.9±7.1 52.4±8.4 12.1±4.8 47.9±8.1 12.7±5.0 -0.66^{+0.09}_{−0.10} -0.09^{+0.13}_{−0.13} 0.51^{+0.16}_{−0.15} N N 0.6 38.5 6 ≤2.1 - - - - - - - - - - - 0.0 ≤37.0 7 ≤1.3 - - - - - - - - - - - 0.0 ≤36.8 8 12.4±5.0 5.5±3.6 4.3±3.4 9.8±4.4 2.6±3.2 8.0±4.1 3.5±3.4 -0.49^{+0.27}_{−0.30} 0.21^{+0.33}_{−0.26} 0.21^{+0.49}_{−0.42} - - 0.2 37.7 9 ≤5.7 - - - - - - - - - - - 0.0 ≤37.4 10 ≤0.6 - - - - - - - - - - - 0.0 ≤36.4 11 9.1±4.6 -0.7±1.9 6.4±3.8 5.8±3.8 3.3±3.4 4.2±3.4 5.2±3.8 0.02^{+0.38}_{−0.37} -1.07^{+0.61}_{−0.92} 0.27^{+0.43}_{−0.32} - - 0.8 37.6 12 ≤2.6 - - - - - - - - - - - 0.6 ≤37.0 13 151.0±13.4 43.0±7.7 74.5±9.7 117.5±11.9 33.4±7.0 104.0±11.3 43.2±7.8 -0.48^{+0.06}_{−0.08} -0.11^{+0.07}_{−0.10} 0.37^{+0.11}_{−0.08} N N 1.1 38.8 14 28.1±6.6 10.3±4.4 12.1±4.7 22.4±6.0 5.7±3.8 17.9±5.4 8.6±4.3 -0.42^{+0.16}_{−0.19} 0.03^{+0.19}_{−0.19} 0.35^{+0.24}_{−0.24} N N 0.3 38.1 15 ≤10.1 - - - - - - - - - - - 0.8 ≤37.7 16 ≤7.2 - - - - - - - - - - - 1.0 ≤37.5 17 15.2±5.5 2.7±3.2 10.1±4.4 12.9±5.0 2.3±3.2 13.3±5.0 2.1±3.2 -0.82^{+0.12}_{−0.18} -0.40^{+0.32}_{−0.43} 0.56^{+0.54}_{−0.35} - - 0.9 37.8 18 ≤0.9 - - - - - - - - - - - 0.4 ≤36.6 19 8.8±4.6 0.2±2.3 6.3±3.8 6.6±4.0 2.2±3.2 6.2±3.8 1.9±3.2 -0.66^{+0.19}_{−0.34} -0.69^{+0.46}_{−0.91} 0.40^{+0.57}_{−0.40} - - 0.6 37.6 20 ≤7.3 - - - - - - - - - - - 0.2 ≤37.5 21 ≤1.9 - - - - - - - - - - - 1.5 ≤36.9 22 ≤2.3 - - - - - - - - - - - 1.1 ≤37.0 23 ≤9.3 - - - - - - - - - - - 0.3 ≤37.6 24 ≤9.2 - - - - - - - - - - - 0.5 ≤37.6 25 ≤2.9 - - - - - - - - - - - 0.0 ≤37.1 26 ≤0.8 - - - - - - - - - - - 2.3 ≤36.6 27 ≤2.0 - - - - - - - - - - - 1.1 ≤36.9 28 ≤7.4 - - - - - - - - - - - 1.0 ≤37.5 29 ≤14.7 - - - - - - - - - - - 0.1 ≤37.8 30 ≤4.0 - - - - - - - - - - - 0.0 ≤37.2 31 41.6±7.8 11.4±4.6 24.1±6.1 35.5±7.1 6.1±4.0 32.1±6.8 7.9±4.3 -0.65^{+0.12}_{−0.13} -0.23^{+0.15}_{−0.16} 0.59^{+0.24}_{−0.19} N N 0.9 38.2 32 ≤2.6 - - - - - - - - - - - 2.7 ≤37.0 33 ≤4.5 - - - - - - - - - - - 0.0 ≤37.3 34 ≤1.1 - - - - - - - - - - - 0.0 ≤36.7 35 14.9±5.5 4.9±3.6 7.8±4.1 12.7±5.0 2.2±3.2 11.6±4.7 1.7±3.2 -0.83^{+0.12}_{−0.17} -0.11^{+0.30}_{−0.29} 0.48^{+0.54}_{−0.40} - - 0.4 37.8 36 ≤8.3 - - - - - - - - - - - 0.5 ≤37.5 37 ≤7.9 - - - - - - - - - - - 0.1 ≤37.5 38 5.4±5.2 0.3±2.3 -0.2±2.3 0.1±2.7 4.8±3.8 -0.4±2.3 5.6±4.0 0.89^{+0.11}_{−0.15} 0.15^{+1.07}_{−1.07} -0.69^{+0.54}_{−0.99} - - 0.6 37.3 39 18.2±5.4 5.8±3.6 8.8±4.1 14.6±5.0 3.6±3.2 11.7±4.6 6.6±3.8 -0.34^{+0.20}_{−0.22} -0.08^{+0.21}_{−0.24} 0.38^{+0.29}_{−0.25} N N 1.2 37.9 40 21.8±4.3 4.2±3.4 13.1±4.8 17.3±5.4 4.5±3.6 14.7±5.1 6.3±4.0 -0.46^{+0.19}_{−0.22} -0.38^{+0.25}_{−0.26} 0.46^{+0.32}_{−0.25} N N 1.9 37.9 41 66.7±9.5 14.8±5.1 30.8±6.7 45.7±8.0 21.0±5.9 39.1±7.5 26.9±6.5 -0.25^{+0.10}_{−0.14} -0.21^{+0.13}_{−0.16} 0.20^{+0.13}_{−0.12} N N 0.2 38.4 42 44.0±8.0 9.8±4.4 28.0±6.5 37.8±7.4 6.2±4.0 33.7±7.0 9.9±4.6 -0.59^{+0.12}_{−0.13} -0.35^{+0.14}_{−0.19} 0.64^{+0.25}_{−0.18} N N 0.3 38.3 43 17.7±5.7 6.1±3.8 8.0±4.1 14.2±5.1 3.6±3.4 14.0±5.0 4.3±3.6 -0.60^{+0.20}_{−0.22} -0.03^{+0.24}_{−0.24} 0.35^{+0.35}_{−0.32} - - 0.2 37.9 44 ≤4.0 - - - - - - - - - - - 0.8 ≤37.2 45 ≤1.6 - - - - - - - - - - - 1.4 ≤36.8 46 ≤2.3 - - - - - - - - - - - 1.4 ≤37.0 47 ≤1.2 - - - - - - - - - - - 2.2 ≤36.7 48 ≤2.3 - - - - - - - - - - - 1.2 ≤37.0 49 ≤5.5 - - - - - - - - - - - 1.3 ≤37.4 50 13.2±5.1 5.2±3.6 4.4±3.4 9.6±4.4 3.6±3.4 7.0±4.0 6.5±4.0 -0.12^{+0.29}_{−0.30} 0.16^{+0.30}_{−0.32} 0.11^{+0.37}_{−0.38} - - 0.3 37.7

TABLE 7 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

51 ≤5.6 - - - - - - - - - - - 2.2 ≤37.4 52 ≤0.5 - - - - - - - - - - - 1.3 ≤36.3 53 ≤10.0 - - - - - - - - - - - 0.1 ≤37.6 54 10.2±5.1 4.1±3.6 4.5±3.6 8.6±4.6 1.6±3.2 6.8±4.1 2.3±3.4 -0.62^{+0.19}_{−0.19} 0.05^{+0.38}_{−0.43} 0.35^{+0.72}_{−0.51} - - 0.4 37.6 55 ≤1.1 - - - - - - - - - - - 1.7 ≤36.7 56 14.4±5.7 0.0±2.7 9.0±4.4 9.0±4.7 5.4±4.0 5.1±4.0 9.3±4.6 0.25^{+0.32}_{−0.34} -0.76^{+0.45}_{−0.92} 0.24^{+0.30}_{−0.29} - - 0.8 37.8 57 ≤10.5 - - - - - - - - - - - 0.1 ≤37.6 58 ≤7.5 - - - - - - - - - - - 0.7 ≤37.5 59 ≤3.7 - - - - - - - - - - - 0.0 ≤37.2 60 ≤10.8 - - - - - - - - - - - 0.8 ≤37.6 61 ≤0.6 - - - - - - - - - - - 1.6 ≤36.4 62 ≤2.8 - - - - - - - - - - - 0.0 ≤37.1 63 9.0±4.7 2.6±3.2 4.7±3.6 7.3±4.3 1.6±2.9 6.0±4.0 1.5±2.9 -0.70^{+0.20}_{−0.30} -0.13^{+0.42}_{−0.51} 0.38^{+0.64}_{−0.49} - - 1.3 37.6 64 ≤6.0 - - - - - - - - - - - 0.1 ≤37.4 65 ≤15.8 - - - - - - - - - - - 0.4 ≤37.8 66 27.0±6.8 3.7±3.6 14.4±5.1 18.1±5.8 8.9±4.4 12.4±5.0 14.8±5.2 0.02^{+0.21}_{−0.21} -0.46^{+0.30}_{−0.40} 0.24^{+0.19}_{−0.21} N P 1.6 38.0 67 13.5±5.4 -0.1±2.3 14.6±5.1 14.5±5.2 -1.0±2.3 14.3±5.1 -0.3±2.7 -0.97^{+0.05}_{−0.03} -1.07^{+0.46}_{−0.92} 1.30^{+0.92}_{−0.54} - - 0.0 37.7 68 20.8±6.2 2.7±3.2 9.7±4.4 12.4±5.0 8.4±4.4 10.2±4.6 9.0±4.6 -0.14^{+0.26}_{−0.25} -0.40^{+0.35}_{−0.43} 0.08^{+0.24}_{−0.21} N N 0.3 37.9 69 ≤9.3 - - - - - - - - - - - 1.4 ≤37.6 70 ≤3.9 - - - - - - - - - - - 0.9 ≤37.2 71 ≤10.1 - - - - - - - - - - - 1.0 ≤37.6 72 24.4±6.4 8.1±4.1 8.6±4.3 16.8±5.4 7.6±4.1 13.4±5.0 8.3±4.3 -0.30^{+0.21}_{−0.22} 0.05^{+0.22}_{−0.21} 0.08^{+0.24}_{−0.24} N N 0.2 38.0 73 16.5±6.3 5.3±3.8 7.2±4.1 12.4±5.1 4.2±3.6 11.3±4.8 4.2±3.6 -0.53^{+0.24}_{−0.26} -0.03^{+0.27}_{−0.32} 0.24^{+0.35}_{−0.32} - - 0.0 37.8 74 12.9±5.7 4.6±3.6 7.0±4.0 11.5±4.8 1.1±2.9 7.3±4.1 3.1±3.4 -0.51^{+0.28}_{−0.32} -0.08^{+0.29}_{−0.32} 0.59^{+0.75}_{−0.46} - - 1.5 37.7 75 ≤0.8 - - - - - - - - - - - 2.7 ≤36.6 76 24.3±6.6 6.7±4.1 15.4±5.2 22.1±6.2 2.2±3.2 18.1±5.7 5.0±3.8 -0.63^{+0.17}_{−0.19} -0.27^{+0.22}_{−0.24} 0.75^{+0.56}_{−0.35} N N 1.7 38.0 77 ≤2.0 - - - - - - - - - - - 0.0 ≤36.9 78 26.7±6.7 6.2±3.8 13.8±5.0 19.9±5.8 6.8±4.1 17.6±5.4 8.5±4.4 -0.41^{+0.19}_{−0.20} -0.24^{+0.21}_{−0.22} 0.32^{+0.24}_{−0.21} N N 0.3 38.0 79 ≤0.9 - - - - - - - - - - - 2.7 ≤36.5 80 ≤7.9 - - - - - - - - - - - 0.7 ≤37.5 81 7.6±5.0 4.3±3.8 2.9±3.4 7.2±4.6 0.5±2.7 4.0±4.0 1.5±3.0 -0.51^{+0.27}_{−0.49} 0.21^{+0.62}_{−0.53} 0.38^{+1.00}_{−0.69} - - 0.3 37.5 82 ≤4.6 - - - - - - - - - - - 0.4 ≤37.3 83 ≤2.3 - - - - - - - - - - - 0.0 ≤37.0 84 27.3±6.5 5.4±3.6 12.2±4.7 17.6±5.4 9.7±4.3 12.8±4.8 13.7±4.8 -0.03^{+0.19}_{−0.20} -0.24^{+0.21}_{−0.24} 0.13^{+0.19}_{−0.18} N N 0.5 38.0 85 15.6±5.2 4.4±3.4 9.4±4.3 13.9±5.0 1.8±2.7 10.1±4.4 2.7±2.9 -0.62^{+0.18}_{−0.24} -0.21^{+0.24}_{−0.27} 0.67^{+0.43}_{−0.32} N N 0.1 37.8 86 ≤5.7 - - - - - - - - - - - 0.5 ≤37.4 87 ≤8.4 - - - - - - - - - - - 0.7 ≤37.5 88 ≤8.1 - - - - - - - - - - - 1.7 ≤37.5 89 ≤1.1 - - - - - - - - - - - 0.0 ≤36.7 90 ≤7.1 - - - - - - - - - - - 0.5 ≤37.5 91 ≤0.9 - - - - - - - - - - - 0.0 ≤36.6 92 ≤1.0 - - - - - - - - - - - 0.0 ≤36.6 93 ≤5.2 - - - - - - - - - - - 0.5 ≤37.3 94 ≤2.9 - - - - - - - - - - - 2.2 ≤37.1 95 ≤3.8 - - - - - - - - - - - 0.0 ≤37.2 96 79.2±10.3 10.9±4.7 56.2±8.7 67.1±9.5 12.1±4.8 60.2±9.0 16.7±5.4 -0.61^{+0.09}_{−0.10} -0.61^{+0.14}_{−0.17} 0.68^{+0.15}_{−0.14} N N 1.6 38.5 97 ≤3.2 - - - - - - - - - - - 0.9 ≤37.1 98 37.8±7.5 9.5±4.4 20.6±5.8 30.1±6.8 7.7±4.0 29.1±6.6 9.5±4.3 -0.55^{+0.12}_{−0.14} -0.24^{+0.16}_{−0.19} 0.46^{+0.16}_{−0.19} N N 0.6 38.2 99 33.5±8.7 7.6±5.4 18.6±6.1 26.1±7.7 7.4±4.5 17.7±6.7 10.4±5.0 -0.32^{+0.22}_{−0.26} -0.32^{+0.36}_{−0.32} 0.37^{+0.30}_{−0.20} N N 1.5 38.1 100 5.5±5.1 -0.5±2.7 3.5±3.8 3.0±4.2 2.5±3.4 2.2±3.8 2.7±3.6 0.03^{+0.34}_{−0.52} -0.46^{+0.69}_{−1.07} 0.13^{+0.76}_{−0.67} - - 1.1 37.3 101 ≤23.8 - - - - - - - - - - - 0.6 ≤38.0 102 ≤13.5 - - - - - - - - - - - 1.3 ≤37.7

TABLE 7 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

103 24.5±6.4 1.0±2.7 15.0±5.1 15.9±5.3 8.6±4.3 14.4±5.1 9.5±4.4 -0.27^{+0.19}_{−0.21} -0.84^{+0.38}_{−0.69} 0.27^{+0.19}_{−0.19} N N 1.5 38.0 104 ≤24.3 - - - - - - - - - - - 1.4 ≤38.0 105 ≤7.5 - - - - - - - - - - - 1.8 ≤37.5 106 ≤15.8 - - - - - - - - - - - 0.9 ≤37.8 107 ≤4.3 - - - - - - - - - - - 0.1 ≤37.5 108 26.9±6.7 4.8±3.6 16.2±5.2 21.0±5.9 5.9±4.0 18.6±5.6 6.6±4.1 -0.53^{+0.18}_{−0.20} -0.40^{+0.21}_{−0.27} 0.43^{+0.27}_{−0.22} N N 2.3 38.0 109 ≤5.7 - - - - - - - - - - - 1.9 ≤37.4 110 ≤2.6 - - - - - - - - - - - 2.1 ≤37.0 111 ≤1.5 - - - - - - - - - - - 1.5 ≤36.8 112 ≤2.7 - - - - - - - - - - - 0.0 ≤37.0 113 ≤2.1 - - - - - - - - - - - 0.0 ≤36.9 114 ≤21.1 - - - - - - - - - - - 1.2 ≤37.9 115 ≤6.5 - - - - - - - - - - - 1.2 ≤37.4 116 ≤13.1 - - - - - - - - - - - 0.0 ≤37.7 117 7623.0±88.7 2499.0±51.3 4013.0±64.6 6512.0±82.1 1111.0±34.5 5499.4±75.51643.6±41.7 -0.59^{+0.01}_{−0.00} -0.12^{+0.01}_{−0.01} 0.59^{+0.01}_{−0.02} N N 37.7 40.5 118 44.7±9.5 7.2±4.6 23.5±6.3 30.7±7.4 13.3±5.0 26.0±6.9 16.0±5.4 -0.30^{+0.15}_{−0.17} -0.41^{+0.23}_{−0.30} 0.29^{+0.15}_{−0.18} N N 0.0 38.3 119 143.4±16.5 27.3±8.0 78.8±11.2 106.1±13.3 37.2±7.6 86.2±12.3 56.8±9.1 -0.27^{+0.08}_{−0.10} -0.40^{+0.15}_{−0.10} 0.35^{+0.10}_{−0.09} N N 0.2 38.8 120 42.1±9.8 3.0±5.1 33.8±8.1 36.9±9.1 5.2±4.1 21.7±7.9 14.3±5.5 -0.26^{+0.20}_{−0.22} -0.92^{+0.48}_{−0.63} 0.79^{+0.33}_{−0.27} N N 0.5 38.2 121 ≤2.5 - - - - - - - - - - - 0.0 ≤37.0 122 ≤1.8 - - - - - - - - - - - 1.0 ≤36.9 123 ≤18.7 - - - - - - - - - - - 9.3 ≤37.9 124 18.6±6.4 5.4±4.1 13.5±5.3 18.9±6.3 -0.3±2.3 17.9±6.1 -0.7±2.3 -0.99^{+0.03}_{−0.01} -0.27^{+0.27}_{−0.35} 1.22^{+0.92}_{−0.46} - - 0.1 37.9 125 4.8±4.3 -1.2±2.3 2.1±3.2 0.9±3.4 3.9±3.4 -0.2±2.9 4.8±3.6 0.79^{+0.21}_{−0.23} -0.46^{+0.84}_{−1.07} -0.16^{+0.48}_{−0.64} - - 0.4 37.3 126 ≤8.2 - - - - - - - - - - - 0.2 ≤37.5 127 ≤11.4 - - - - - - - - - - - 0.6 ≤37.7 128 ≤21.8 - - - - - - - - - - - 0.8 ≤37.9 129 ≤5.2 - - - - - - - - - - - 0.9 ≤37.3 130 13.8±5.6 4.5±3.8 4.1±3.6 8.5±4.7 5.3±3.8 6.7±4.3 4.8±3.8 -0.24^{+0.35}_{−0.38} 0.13^{+0.43}_{−0.45} -0.05^{+0.34}_{−0.43} - - 1.4 37.8 131 ≤9.8 - - - - - - - - - - - 1.3 ≤37.6 132 ≤9.0 - - - - - - - - - - - 2.2 ≤37.6 133 37.0±7.5 3.8±3.4 24.9±6.2 28.7±6.6 8.3±4.3 24.5±6.2 11.9±4.8 -0.40^{+0.15}_{−0.16} -0.67^{+0.24}_{−0.32} 0.48^{+0.19}_{−0.19} N N 0.3 38.2 134 ≤12.6 - - - - - - - - - - - 0.9 ≤37.7 135 ≤22.4 - - - - - - - - - - - 1.5 ≤38.0 136 ≤2.9 - - - - - - - - - - - 1.0 ≤37.1 137 ≤8.0 - - - - - - - - - - - 1.2 ≤37.5 138 ≤10.0 - - - - - - - - - - - 1.4 ≤37.6 139 ≤4.3 - - - - - - - - - - - 0.9 ≤37.2 140 18.1±6.1 1.5±3.2 13.5±5.1 15.1±5.6 3.1±3.4 13.1±5.2 3.5±3.6 -0.67^{+0.19}_{−0.23} -0.67^{+0.40}_{−0.70} 0.59^{+0.46}_{−0.30} - - 2.3 37.9 141 9.0±4.9 2.2±3.2 7.6±4.1 9.9±4.7 -0.9±2.3 9.8±4.6 -0.3±2.7 -0.95^{+0.08}_{−0.05} -0.35^{+0.38}_{−0.56} 1.07^{+0.92}_{−0.54} - - 0.6 37.6 142 ≤3.7 - - - - - - - - - - - 1.0 ≤37.4 143 8.3±4.4 0.3±2.3 4.1±3.4 4.4±3.6 3.9±3.4 1.9±2.9 5.8±3.8 0.53^{+0.33}_{−0.21} -0.53^{+0.53}_{−0.85} 0.05^{+0.38}_{−0.37} - - 0.6 37.6 144 ≤8.1 - - - - - - - - - - - 0.6 ≤37.5 145 ≤5.2 - - - - - - - - - - - 1.2 ≤37.3 146 126.6±15.5 20.1±6.8 83.6±10.8 103.7±12.3 23.2±6.4 90.7±11.5 37.3±7.7 -0.47^{+0.09}_{−0.08} -0.55^{+0.15}_{−0.12} 0.57^{+0.13}_{−0.10} N P 3.1 38.7 147 ≤53.5 - - - - - - - - - - - 0.9 ≤38.3 148 39.4±8.0 6.3±4.1 21.3±6.0 27.6±6.8 11.9±4.8 25.1±6.5 14.3±5.2 -0.34^{+0.16}_{−0.16} -0.40^{+0.21}_{−0.27} 0.28^{+0.16}_{−0.17} N N 1.3 38.2 149 ≤15.6 - - - - - - - - - - - 1.5 ≤37.8 150 ≤6.0 - - - - - - - - - - - 0.7 ≤37.4 151 ≤2.8 - - - - - - - - - - - 0.5 ≤37.1 152 ≤1.8 - - - - - - - - - - - 0.4 ≤36.9 153 ≤1.9 - - - - - - - - - - - 2.1 ≤36.9 154 24.4±8.4 1.7±3.7 14.2±5.4 15.9±6.0 8.7±4.8 12.5±5.4 13.7±5.5 -0.02^{+0.25}_{−0.23} -0.61^{+0.38}_{−0.77} 0.21^{+0.27}_{−0.21} N N 0.6 38.0

TABLE 7 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

155 11.6±5.1 2.8±3.2 5.4±3.8 8.2±4.4 3.4±3.4 4.0±3.6 5.0±3.8 0.07^{+0.41}_{−0.45} -0.16^{+0.40}_{−0.43} 0.21^{+0.43}_{−0.40} - - 1.1 37.7 156 ≤4.4 - - - - - - - - - - - 3.8 ≤37.3 157 15.7±6.3 1.2±3.2 9.7±4.7 10.9±5.2 4.5±3.8 11.3±5.1 3.8±3.8 -0.60^{+0.22}_{−0.27} -0.53^{+0.38}_{−0.85} 0.32^{+0.38}_{−0.29} - - 1.9 37.8 158 104.6±14.5 25.0±6.3 48.2±8.2 73.2±9.9 31.6±6.9 63.2±9.2 35.9±7.3 -0.34^{+0.10}_{−0.09} -0.17^{+0.09}_{−0.13} 0.21^{+0.11}_{−0.10} N N 0.0 38.6 159 ≤3.7 - - - - - - - - - - - 1.0 ≤37.2 160 ≤8.4 - - - - - - - - - - - 0.2 ≤37.6 161 ≤3.1 - - - - - - - - - - - 0.0 ≤37.1 162 14.8±5.9 9.7±4.6 5.0±3.8 14.7±5.5 0.1±3.0 10.3±4.9 1.0±3.2 -0.87^{+0.13}_{−0.13} 0.35^{+0.32}_{−0.27} 0.61^{+0.92}_{−0.53} - - 2.2 37.8 163 75.2±12.6 14.1±5.1 46.2±8.1 60.3±9.1 13.9±5.1 56.3±8.8 18.4±5.7 -0.56^{+0.10}_{−0.10} -0.42^{+0.15}_{−0.13} 0.54^{+0.15}_{−0.13} N N 1.0 38.5 164 ≤10.7 - - - - - - - - - - - 0.4 ≤37.6 165 ≤7.9 - - - - - - - - - - - 0.7 ≤37.5 166 8.8±5.3 1.1±2.9 8.4±4.4 9.5±4.8 -0.5±2.7 9.6±4.7 -1.3±2.7 -0.96^{+0.07}_{−0.04} -0.53^{+0.45}_{−0.77} 0.92^{+0.91}_{−0.54} - - 0.9 37.6 167 1.1±3.8 1.0±2.7 -0.1±2.7 0.9±3.2 0.2±2.9 1.7±3.2 -0.2±2.9 -0.49^{+0.27}_{−0.51} 0.23^{+1.07}_{−0.92} -0.08^{+1.07}_{−1.07} - - 0.7 36.7 168 ≤9.1 - - - - - - - - - - - 1.4 ≤37.6 169 ≤12.9 - - - - - - - - - - - 0.2 ≤37.7 170 7.2±4.7 -0.5±2.3 4.6±3.8 4.2±4.0 3.0±3.4 5.3±4.0 2.6±3.4 -0.45^{+0.23}_{−0.40} -0.69^{+0.61}_{−0.99} 0.19^{+0.51}_{−0.48} - - 0.6 37.5 171 7.2±4.6 0.8±2.7 7.4±4.1 8.2±4.4 -1.0±2.3 7.2±4.1 -0.2±2.7 -0.92^{+0.11}_{−0.08} -0.61^{+0.46}_{−0.77} 0.99^{+1.00}_{−0.46} - - 0.5 37.5 172 ≤8.7 - - - - - - - - - - - 1.2 ≤37.5 173 ≤0.5 - - - - - - - - - - - 0.9 ≤36.3 174 ≤3.3 - - - - - - - - - - - 1.4 ≤37.1 175 ≤4.1 - - - - - - - - - - - 0.7 ≤37.2 176 ≤2.3 - - - - - - - - - - - 0.7 ≤37.0 177 ≤11.9 - - - - - - - - - - - 1.5 ≤37.7 178 ≤3.0 - - - - - - - - - - - 0.0 ≤37.1 179 ≤5.7 - - - - - - - - - - - 1.4 ≤37.4 180 ≤1.6 - - - - - - - - - - - 0.0 ≤36.8 181 ≤3.1 - - - - - - - - - - - 1.1 ≤37.1 182 ≤8.0 - - - - - - - - - - - 0.5 ≤37.5 183 6.2±4.3 0.8±2.7 0.0±2.3 0.8±2.9 5.4±3.8 0.4±2.7 5.2±3.8 0.78^{+0.22}_{−0.21} 0.31^{+1.07}_{−1.00} -0.76^{+0.53}_{−0.92} - - 0.7 37.4 184 108.4±11.7 24.0±6.1 52.2±8.4 76.2±9.9 32.2±6.9 67.0±9.4 39.0±7.5 -0.32^{+0.08}_{−0.10} -0.21^{+0.07}_{−0.15} 0.23^{+0.11}_{−0.09} N N 0.2 38.6 185 37.2±7.6 1.8±2.9 29.6±6.6 31.3±6.9 5.8±4.0 26.8±6.5 9.5±4.6 -0.53^{+0.14}_{−0.16} -0.99^{+0.35}_{−0.57} 0.70^{+0.24}_{−0.22} N N 3.2 38.2 186 4.9±4.3 0.9±2.7 1.8±3.2 2.7±3.6 2.2±3.2 3.6±3.6 1.7±3.2 -0.45^{+0.27}_{−0.55} -0.08^{+0.84}_{−0.91} -0.03^{+0.75}_{−0.80} - - 0.3 37.3 187 16.2±5.8 4.5±3.6 8.8±4.4 13.3±5.2 2.9±3.4 13.3±5.1 2.5±3.4 -0.78^{+0.12}_{−0.11} -0.16^{+0.27}_{−0.32} 0.43^{+0.51}_{−0.35} - - 0.8 37.8 188 ≤1.4 - - - - - - - - - - - 0.0 ≤36.8 189 21.4±6.7 3.7±3.4 11.6±4.7 15.4±5.3 6.8±4.1 9.2±4.4 11.4±4.8 0.04^{+0.24}_{−0.24} -0.38^{+0.30}_{−0.32} 0.24^{+0.27}_{−0.21} - - 0.8 37.9 190 17.0±5.8 3.1±3.2 9.0±4.4 12.1±5.0 4.9±3.8 10.7±4.7 5.5±4.0 -0.40^{+0.26}_{−0.27} -0.32^{+0.29}_{−0.38} 0.27^{+0.32}_{−0.27} - - 0.2 37.8 191 16.2±5.7 5.0±3.6 6.3±4.0 11.3±4.8 4.9±3.8 10.0±4.6 4.5±3.8 -0.46^{+0.27}_{−0.29} 0.00^{+0.29}_{−0.29} 0.13^{+0.35}_{−0.32} - - 0.9 37.8 192 ≤0.8 - - - - - - - - - - - 0.0 ≤36.5 193 ≤9.3 - - - - - - - - - - - 0.5 ≤37.6 194 78.8±10.9 9.6±4.4 44.9±7.8 54.5±8.6 24.0±6.2 54.4±8.5 24.6±6.3 -0.44^{+0.10}_{−0.10} -0.58^{+0.17}_{−0.16} 0.30^{+0.13}_{−0.10} N N 1.8 38.5 195 7.7±4.6 2.0±2.9 5.6±3.8 7.6±4.3 0.0±2.7 7.1±4.1 1.0±2.9 -0.83^{+0.16}_{−0.17} -0.29^{+0.42}_{−0.51} 0.69^{+0.91}_{−0.46} - - 0.9 37.5 196 ≤0.5 - - - - - - - - - - - 1.8 ≤-inf 197 ≤1.7 - - - - - - - - - - - 1.9 ≤36.8 198 ≤2.7 - - - - - - - - - - - 0.0 ≤37.1 199 ≤2.0 - - - - - - - - - - - 1.4 ≤36.9 200 ≤7.2 - - - - - - - - - - - 1.0 ≤37.5 201 ≤1.3 - - - - - - - - - - - 2.7 ≤36.7 202 4.9±4.2 1.5±2.9 0.8±2.7 2.3±3.4 2.5±3.2 3.0±3.4 2.4±3.2 -0.19^{+0.39}_{−0.57} 0.23^{+0.92}_{−0.84} -0.23^{+0.69}_{−0.92} - - 1.4 37.3 203 ≤4.0 - - - - - - - - - - - 1.3 ≤37.2 204 ≤1.6 - - - - - - - - - - - 0.0 ≤36.8 205 3.8±4.0 -0.4±2.3 3.8±3.4 3.5±3.6 0.4±2.7 4.6±3.6 0.1±2.7 -0.85^{+0.18}_{−0.15} -0.61^{+0.61}_{−0.92} 0.53^{+0.92}_{−0.53} - - 0.4 37.2

TABLE 7 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

206 ≤3.7 - - - - - - - - - - - 0.0 ≤37.2 207 ≤2.9 - - - - - - - - - - - 0.0 ≤37.1 208 ≤7.8 - - - - - - - - - - - 0.1 ≤37.5 209 15.5±5.5 0.9±2.7 7.0±4.0 7.9±4.3 7.6±4.1 8.6±4.3 7.2±4.1 -0.16^{+0.26}_{−0.27} -0.53^{+0.38}_{−0.77} 0.00^{+0.24}_{−0.24} - - 0.5 37.8 210 ≤4.6 - - - - - - - - - - - 0.8 ≤37.3 211 9.0±4.7 3.1±3.2 6.7±4.0 9.8±4.6 -0.8±2.3 7.3±4.1 0.0±2.7 -0.92^{+0.12}_{−0.08} -0.21^{+0.34}_{−0.38} 0.99^{+0.92}_{−0.53} - - 0.4 37.6 212 ≤1.0 - - - - - - - - - - - 0.0 ≤36.6 213 ≤5.1 - - - - - - - - - - - 2.1 ≤37.3 214 ≤1.1 - - - - - - - - - - - 2.0 ≤36.6 215 ≤2.3 - - - - - - - - - - - 1.1 ≤37.0 216 4.6±4.2 -0.4±2.3 2.6±3.2 2.2±3.4 2.3±3.2 3.4±3.4 1.9±3.2 -0.39^{+0.28}_{−0.36} -0.46^{+0.69}_{−1.07} 0.05^{+0.67}_{−0.59} - - 1.3 37.3 217 5.8±4.1 1.4±2.7 2.9±3.2 4.2±3.6 1.5±2.9 3.9±3.4 1.1±2.9 -0.64^{+0.25}_{−0.36} -0.16^{+0.59}_{−0.67} 0.19^{+0.75}_{−0.59} - - 0.0 37.4 218 ≤1.3 - - - - - - - - - - - 0.0 ≤36.7 219 ≤9.5 - - - - - - - - - - - 0.6 ≤37.6 220 34.0±7.2 12.8±4.8 16.4±5.2 29.3±6.6 4.8±3.6 26.9±6.4 5.5±3.8 -0.70^{+0.13}_{−0.14} -0.02^{+0.15}_{−0.17} 0.51^{+0.29}_{−0.22} N N 1.8 38.1 221 ≤1.1 - - - - - - - - - - - 0.0 ≤36.7 222 ≤3.9 - - - - - - - - - - - 0.0 ≤37.2 223 ≤8.3 - - - - - - - - - - - 0.3 ≤37.5 224 ≤1.5 - - - - - - - - - - - 1.1 ≤36.8 225 15.0±5.5 3.0±3.2 7.2±4.0 10.2±4.6 4.8±3.8 8.8±4.3 4.7±3.8 -0.39^{+0.29}_{−0.29} -0.24^{+0.32}_{−0.38} 0.19^{+0.32}_{−0.30} - - 0.7 37.8 226 ≤3.4 - - - - - - - - - - - 1.2 ≤37.2 227 25.6±6.8 7.7±4.1 12.1±4.7 19.8±5.8 6.9±4.1 17.0±5.3 8.5±4.4 -0.40^{+0.19}_{−0.20} -0.11^{+0.22}_{−0.21} 0.27^{+0.24}_{−0.24} N N 2.1 38.0 228 12.9±5.5 3.7±3.4 8.2±4.1 11.9±4.8 0.8±2.9 11.9±4.7 1.7±3.2 -0.84^{+0.12}_{−0.16} -0.21^{+0.29}_{−0.35} 0.70^{+0.78}_{−0.46} - - 1.0 37.7 229 10.5±5.0 2.6±3.2 8.1±4.1 10.7±4.7 -0.2±2.7 10.6±4.6 -0.3±2.7 -0.96^{+0.08}_{−0.04} -0.35^{+0.35}_{−0.45} 0.92^{+0.84}_{−0.54} - - 0.7 37.6 230 ≤5.5 - - - - - - - - - - - 3.4 ≤37.4 231 12.4±5.2 0.4±2.7 10.1±4.4 10.4±4.7 1.9±3.2 9.9±4.4 2.6±3.4 -0.69^{+0.14}_{−0.21} -0.76^{+0.45}_{−0.84} 0.62^{+0.61}_{−0.38} - - 0.2 37.7 232 ≤1.3 - - - - - - - - - - - 0.0 ≤36.7 233 ≤12.4 - - - - - - - - - - - 0.6 ≤37.7 234 ≤6.8 - - - - - - - - - - - 0.0 ≤37.5 235 ≤0.8 - - - - - - - - - - - 1.3 ≤36.5 236 ≤5.7 - - - - - - - - - - - 1.0 ≤37.4

NOTE. — Col. (1): Master ID, cols. (2)−(8): net counts, in each of the 7 energy bands (see Table 2 for definitions of these bands), col. (9): hardness ratio, cols. (10) and (11) color values, errors are given as 1σ, cols. (12) and (13): short-term variability, where (BB) indicate Bayesian block analysis and (K-S) indicates the Kolmogorov-Smirnov test, in both columns symbols indicate - (N) non-variable in all observations, (V) variable in at least one observation, (P) possible variability in at least one observation, col. (14): the significance of the change in L_X between the previous observation and the current observation respectively (equation 2), col. (15): log L_X (0.3−8.0 keV). Upper limit values of net B and L_X are at the 68% confidence level.

TABLE 8 SOURCE COUNTS, HARDNESS RATIOS, COLOR-COLOR VALUES AND VARIABILITY: OBSERVATION 4

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

1 22.1±6.1 -0.8±1.9 8.4±4.1 7.6±4.1 14.5±5.1 5.2±3.6 17.4±5.4 0.50^{+0.21}_{−0.18} -1.15^{+0.54}_{−0.99} -0.21^{+0.18}_{−0.19} N N 0.0 38.0 2 97.9±11.3 11.4±4.7 68.0±9.4 79.4±10.2 18.4±5.8 69.9±9.5 27.8±6.7 -0.50^{+0.08}_{−0.09} -0.62^{+0.13}_{−0.16} 0.61^{+0.11}_{−0.13} N N 0.5 38.3 3 ≤0.9 - - - - - - - - - - - 0.0 ≤36.3 4 45.5±8.4 11.4±4.7 24.8±6.3 36.1±7.4 9.4±4.7 29.8±6.7 13.8±5.3 -0.44^{+0.13}_{−0.16} -0.20^{+0.16}_{−0.17} 0.43^{+0.21}_{−0.16} N N 2.0 38.0 5 131.6±12.8 42.5±7.7 63.8±9.2 106.3±11.5 25.4±6.5 88.4±10.6 31.0±7.0 -0.53^{+0.07}_{−0.08} -0.06^{+0.08}_{−0.10} 0.42^{+0.11}_{−0.10} N Y 0.5 38.4 6 ≤10.4 - - - - - - - - - - - 0.8 ≤37.3 7 ≤2.6 - - - - - - - - - - - 0.0 ≤36.7 8 23.8±6.7 3.4±3.4 17.3±5.4 20.7±6.0 3.1±3.8 17.1±5.4 5.7±4.3 -0.59^{+0.21}_{−0.22} -0.54^{+0.30}_{−0.37} 0.67^{+0.56}_{−0.32} N N 0.3 37.7 9 ≤5.5 - - - - - - - - - - - 0.0 ≤37.1 10 ≤2.3 - - - - - - - - - - - 0.0 ≤36.7 11 16.4±6.0 2.4±3.2 9.0±4.4 11.4±5.0 5.0±4.1 11.6±4.8 5.5±4.3 -0.46^{+0.29}_{−0.28} -0.40^{+0.37}_{−0.51} 0.24^{+0.38}_{−0.29} - - 0.3 37.5 12 ≤1.8 - - - - - - - - - - - 0.0 ≤36.6 13 222.7±16.2 49.7±8.3 117.7±12.0 167.4±14.1 55.4±8.7 154.0±13.6 66.0±9.4 -0.47^{+0.06}_{−0.06} -0.24^{+0.07}_{−0.08} 0.36^{+0.08}_{−0.07} N N 2.6 38.7 14 50.8±8.7 10.1±4.6 34.1±7.1 44.1±8.0 6.6±4.3 39.8±7.5 9.3±4.7 -0.67^{+0.11}_{−0.12} -0.40^{+0.16}_{−0.16} 0.70^{+0.27}_{−0.19} N N 0.6 38.0 15 16.1±6.1 2.6±3.2 6.5±4.1 9.1±4.7 7.0±4.6 6.2±4.1 7.5±4.7 0.01^{+0.38}_{−0.35} -0.24^{+0.40}_{−0.48} 0.00^{+0.32}_{−0.32} - - 0.1 37.5 16 ≤2.9 - - - - - - - - - - - 1.3 ≤36.7 17 33.4±7.6 8.4±4.4 14.6±5.2 23.0±6.4 10.4±4.8 19.3±5.8 14.9±5.4 -0.21^{+0.17}_{−0.19} -0.11^{+0.22}_{−0.21} 0.18^{+0.20}_{−0.20} N N 0.1 37.8 18 ≤3.1 - - - - - - - - - - - 0.0 ≤36.8 19 18.6±6.1 3.9±3.4 16.4±5.3 20.3±5.9 -1.6±2.7 19.3±5.7 -1.1±2.9 -0.98^{+0.04}_{−0.02} -0.48^{+0.24}_{−0.32} 1.30^{+0.92}_{−0.54} - - 0.0 37.6 20 ≤6.4 - - - - - - - - - - - 1.0 ≤37.1 21 ≤10.5 - - - - - - - - - - - 0.9 ≤37.3 22 6.6±5.0 2.2±3.2 5.6±4.0 7.8±4.6 -1.2±2.9 7.3±4.3 0.2±3.4 -0.86^{+0.16}_{−0.14} -0.24^{+0.45}_{−0.59} 0.76^{+1.00}_{−0.61} - - 0.9 37.1 23 9.5±5.0 2.9±3.2 5.4±3.8 8.3±4.4 1.2±3.2 9.2±4.4 0.9±3.2 -0.87^{+0.14}_{−0.13} -0.16^{+0.40}_{−0.43} 0.46^{+0.76}_{−0.46} - - 0.1 37.4 24 ≤11.3 - - - - - - - - - - - 0.6 ≤37.3 25 ≤18.3 - - - - - - - - - - - 1.7 ≤37.5 26 19.1±6.3 2.4±3.2 9.5±4.6 11.9±5.1 7.2±4.4 8.6±4.4 8.4±4.7 -0.09^{+0.30}_{−0.29} -0.43^{+0.38}_{−0.48} 0.13^{+0.30}_{−0.24} - - 2.9 37.6 27 ≤6.6 - - - - - - - - - - - 0.7 ≤37.1 28 ≤6.4 - - - - - - - - - - - 0.9 ≤37.1 29 23.7±6.7 2.4±3.2 16.0±5.3 18.4±5.8 5.3±4.1 17.7±5.6 6.8±4.4 -0.52^{+0.21}_{−0.21} -0.64^{+0.35}_{−0.46} 0.46^{+0.34}_{−0.25} N N 0.0 37.7 30 ≤5.0 - - - - - - - - - - - 0.0 ≤37.0 31 91.4±11.0 13.8±5.0 55.3±8.7 69.1±9.6 22.3±6.2 58.3±8.9 32.8±7.1 -0.34^{+0.10}_{−0.10} -0.47^{+0.09}_{−0.18} 0.42^{+0.12}_{−0.11} Y N 0.1 38.2 32 ≤3.7 - - - - - - - - - - - 0.0 ≤36.9 33 ≤10.9 - - - - - - - - - - - 0.6 ≤37.3 34 ≤1.0 - - - - - - - - - - - 0.0 ≤36.3 35 51.5±8.7 6.5±4.0 27.4±6.5 33.9±7.1 17.6±5.7 28.7±6.6 22.2±6.2 -0.20^{+0.14}_{−0.14} -0.53^{+0.23}_{−0.19} 0.22^{+0.14}_{−0.14} N N 1.3 38.0 36 8.9±5.3 3.7±3.4 2.6±3.4 6.3±4.3 2.6±3.8 4.3±3.8 4.0±4.1 -0.17^{+0.47}_{−0.46} 0.19^{+0.61}_{−0.48} 0.00^{+0.80}_{−0.70} - - 0.2 37.2 37 ≤3.2 - - - - - - - - - - - 1.3 ≤36.8 38 9.5±6.6 6.5±4.0 3.3±3.6 9.8±4.8 -0.3±3.2 10.3±4.7 -1.2±3.2 -0.95^{+0.09}_{−0.05} 0.32^{+0.48}_{−0.37} 0.46^{+0.99}_{−0.69} - - 0.1 37.3 39 66.7±11.7 16.2±5.3 36.6±7.3 52.8±8.6 13.8±5.3 43.4±7.8 20.2±6.1 -0.42^{+0.10}_{−0.13} -0.26^{+0.14}_{−0.13} 0.43^{+0.17}_{−0.13} N P 1.8 38.1 40 ≤35.4 - - - - - - - - - - - 1.4 ≤37.8 41 133.7±13.0 27.9±6.5 78.3±10.0 106.3±11.6 27.5±6.7 91.9±10.8 34.8±7.4 -0.50^{+0.07}_{−0.08} -0.33^{+0.08}_{−0.12} 0.48^{+0.11}_{−0.09} N N 0.1 38.4 42 112.5±12.0 27.2±6.5 70.2±9.5 97.4±11.1 15.1±5.3 85.4±10.4 22.7±6.2 -0.63^{+0.08}_{−0.07} -0.30^{+0.08}_{−0.12} 0.70^{+0.12}_{−0.14} N N 0.9 38.3 43 15.3±6.1 1.0±3.2 10.2±4.7 11.2±5.2 4.1±4.0 12.6±5.1 3.2±4.0 -0.74^{+0.15}_{−0.11} -0.61^{+0.38}_{−0.84} 0.38^{+0.45}_{−0.33} - - 1.7 37.5 44 ≤11.0 - - - - - - - - - - - 0.8 ≤37.3 45 10.9±5.4 -1.0±2.3 7.8±4.3 6.8±4.4 4.0±3.8 3.9±3.8 7.7±4.4 0.33^{+0.36}_{−0.39} -0.92^{+0.54}_{−0.91} 0.27^{+0.43}_{−0.32} - - 1.7 37.3 46 ≤5.4 - - - - - - - - - - - 0.0 ≤37.0 47 ≤2.3 - - - - - - - - - - - 0.0 ≤36.7 48 16.1±6.7 4.4±3.8 10.0±4.6 14.3±5.4 2.5±3.8 11.7±5.0 3.0±4.0 -0.72^{+0.15}_{−0.28} -0.24^{+0.29}_{−0.38} 0.51^{+0.62}_{−0.40} - - 2.0 37.5 49 ≤6.6 - - - - - - - - - - - 0.8 ≤37.1

TABLE 8 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

50 34.8±7.7 11.2±4.8 18.9±5.7 30.1±7.0 4.8±4.1 31.2±6.9 4.3±4.1 -0.82^{+0.09}_{−0.13} -0.13^{+0.17}_{−0.18} 0.56^{+0.38}_{−0.27} N N 0.5 37.8 51 15.2±6.0 5.9±4.0 7.4±4.3 13.3±5.3 1.9±3.6 14.1±5.2 0.9±3.6 -0.91^{+0.11}_{−0.09} 0.00^{+0.29}_{−0.29} 0.46^{+0.75}_{−0.46} - - 1.0 37.5 52 ≤12.3 - - - - - - - - - - - 2.0 ≤37.4 53 12.2±6.3 4.4±3.8 7.9±4.3 12.3±5.2 0.1±3.4 11.8±5.0 -0.4±3.4 -0.94^{+0.10}_{−0.06} -0.13^{+0.32}_{−0.38} 0.69^{+0.91}_{−0.46} - - 0.3 37.4 54 16.0±6.3 6.8±4.3 7.7±4.4 14.5±5.7 1.5±3.6 12.2±5.2 2.9±4.0 -0.74^{+0.15}_{−0.26} 0.03^{+0.29}_{−0.30} 0.51^{+0.78}_{−0.46} - - 0.4 37.5 55 ≤11.5 - - - - - - - - - - - 1.5 ≤37.3 56 ≤8.1 - - - - - - - - - - - 2.0 ≤37.2 57 9.9±5.8 -0.7±2.9 7.7±4.4 7.0±4.8 2.9±4.0 5.4±4.3 5.3±4.4 -0.11^{+0.47}_{−0.47} -0.76^{+0.53}_{−0.92} 0.35^{+0.64}_{−0.40} - - 0.5 37.3 58 ≤1.6 - - - - - - - - - - - 1.1 ≤36.5 59 ≤1.1 - - - - - - - - - - - 0.0 ≤36.3 60 ≤10.7 - - - - - - - - - - - 1.1 ≤37.3 61 ≤2.5 - - - - - - - - - - - 0.0 ≤36.7 62 ≤16.5 - - - - - - - - - - - 1.7 ≤37.5 63 23.4±6.8 1.9±3.2 15.3±5.3 17.3±5.8 6.1±4.3 16.5±5.6 6.7±4.4 -0.51^{+0.22}_{−0.22} -0.67^{+0.38}_{−0.62} 0.40^{+0.30}_{−0.24} N P 0.3 37.6 64 ≤11.3 - - - - - - - - - - - 0.2 ≤37.4 65 23.0±6.2 6.0±3.8 14.1±5.0 20.2±5.8 2.8±3.2 19.6±5.7 3.7±3.4 -0.73^{+0.14}_{−0.17} -0.27^{+0.22}_{−0.21} 0.67^{+0.38}_{−0.32} N N 0.0 37.7 66 35.4±7.2 6.2±3.8 22.3±5.9 28.5±6.5 6.9±4.0 24.8±6.2 10.8±4.6 -0.45^{+0.14}_{−0.16} -0.43^{+0.19}_{−0.21} 0.51^{+0.21}_{−0.16} N N 1.3 37.8 67 40.3±7.9 1.0±2.9 18.4±5.6 19.4±5.9 20.9±6.0 17.5±5.6 23.4±6.3 0.07^{+0.16}_{−0.18} -1.03^{+0.52}_{−0.67} 0.01^{+0.12}_{−0.18} N N 0.8 37.9 68 43.7±8.4 12.2±5.0 25.5±6.4 37.8±7.6 5.9±4.3 32.4±7.1 10.4±5.0 -0.57^{+0.14}_{−0.15} -0.22^{+0.15}_{−0.17} 0.62^{+0.32}_{−0.22} N N 0.2 38.0 69 10.4±5.2 5.5±3.8 4.7±3.8 10.2±4.8 0.2±2.9 7.5±4.3 1.6±3.4 -0.76^{+0.19}_{−0.24} 0.13^{+0.38}_{−0.32} 0.53^{+0.92}_{−0.53} - - 0.2 37.3 70 ≤19.2 - - - - - - - - - - - 1.5 ≤37.6 71 25.0±6.8 6.0±4.0 7.3±4.3 13.3±5.3 11.6±5.0 13.2±5.1 11.7±5.1 -0.13^{+0.23}_{−0.22} 0.00^{+0.31}_{−0.29} -0.13^{+0.22}_{−0.27} N N 1.1 37.7 72 56.4±9.1 14.3±5.1 31.6±6.9 45.9±8.1 10.5±4.8 41.7±7.7 11.7±5.1 -0.61^{+0.11}_{−0.12} -0.24^{+0.14}_{−0.15} 0.51^{+0.17}_{−0.19} N N 0.3 38.0 73 34.6±8.6 7.3±4.4 18.0±5.7 25.3±6.7 9.7±4.8 22.5±6.3 11.0±5.1 -0.41^{+0.18}_{−0.18} -0.27^{+0.19}_{−0.27} 0.28^{+0.22}_{−0.19} N N 0.1 37.8 74 14.4±6.7 0.9±3.2 10.5±4.7 11.4±5.2 3.4±4.0 10.6±4.8 5.9±4.4 -0.40^{+0.32}_{−0.29} -0.61^{+0.38}_{−0.84} 0.43^{+0.54}_{−0.35} - - 1.0 37.4 75 ≤13.6 - - - - - - - - - - - 1.9 ≤37.4 76 54.9±12.2 6.9±4.3 36.8±7.5 43.7±8.2 11.2±5.0 37.5±7.6 16.5±5.7 -0.45^{+0.13}_{−0.13} -0.61^{+0.20}_{−0.25} 0.54^{+0.17}_{−0.17} N N 0.3 38.0 77 ≤5.2 - - - - - - - - - - - 0.0 ≤37.0 78 53.0±8.9 12.0±4.8 29.9±6.7 41.9±7.8 11.1±5.0 40.2±7.6 11.6±5.1 -0.61^{+0.12}_{−0.12} -0.27^{+0.13}_{−0.19} 0.44^{+0.19}_{−0.16} N N 0.3 38.0 79 ≤62.0 - - - - - - - - - - - 6.8 ≤38.1 80 ≤13.2 - - - - - - - - - - - 0.1 ≤37.4 81 ≤14.0 - - - - - - - - - - - 0.6 ≤37.4 82 ≤6.1 - - - - - - - - - - - 0.3 ≤37.1 83 249.7±22.5 64.8±9.3 144.9±13.2 209.7±15.8 41.3±7.8 179.7±14.6 64.4±9.4 -0.52^{+0.05}_{−0.06} -0.29^{+0.10}_{−0.03} 0.58^{+0.07}_{−0.09} N N 10.9 38.7 84 58.5±11.2 13.4±5.6 26.1±6.8 39.5±8.3 19.4±6.0 36.4±8.0 20.9±6.2 -0.33^{+0.12}_{−0.15} -0.22^{+0.19}_{−0.17} 0.14^{+0.18}_{−0.12} N N 0.0 38.0 85 ≤34.5 - - - - - - - - - - - 0.4 ≤37.8 86 20.5±6.0 4.9±3.6 14.6±5.1 19.5±5.8 1.1±2.7 14.8±5.2 6.0±3.8 -0.48^{+0.19}_{−0.21} -0.35^{+0.22}_{−0.27} 0.97^{+0.67}_{−0.43} N N 1.7 37.6 87 ≤16.6 - - - - - - - - - - - 0.0 ≤37.5 88 ≤28.2 - - - - - - - - - - - 1.2 ≤37.7 89 ≤2.3 - - - - - - - - - - - 0.0 ≤36.6 90 ≤3.6 - - - - - - - - - - - 1.3 ≤36.8 91 93.5±11.2 42.3±7.8 48.0±8.2 90.3±10.9 3.2±3.4 77.3±10.2 8.2±4.3 -0.83^{+0.05}_{−0.07} 0.04^{+0.08}_{−0.11} 1.08^{+0.43}_{−0.25} N N 8.2 38.2 92 ≤3.0 - - - - - - - - - - - 0.0 ≤36.7 93 ≤2.2 - - - - - - - - - - - 0.0 ≤36.6 94 ≤8.3 - - - - - - - - - - - 0.8 ≤37.2 95 ≤1.1 - - - - - - - - - - - 0.0 ≤36.3 96 176.6±14.8 34.9±7.2 100.3±11.2 135.2±12.9 41.4±7.8 113.1±11.9 55.7±8.9 -0.40^{+0.07}_{−0.08} -0.36^{+0.08}_{−0.09} 0.42^{+0.08}_{−0.09} N N 0.3 38.5 97 ≤6.7 - - - - - - - - - - - 0.0 ≤37.1 98 67.6±12.0 16.5±6.1 38.8±7.9 55.3±9.5 12.3±5.3 47.1±8.9 16.6±5.8 -0.53^{+0.12}_{−0.13} -0.31^{+0.19}_{−0.14} 0.53^{+0.17}_{−0.17} N N 0.6 38.1 99 53.1±9.6 21.1±6.5 24.0±6.6 45.2±8.8 7.9±4.4 39.2±8.3 8.4±4.6 -0.69^{+0.11}_{−0.13} 0.03^{+0.15}_{−0.16} 0.48^{+0.24}_{−0.20} N N 0.9 38.0 100 23.2±7.3 7.2±4.5 10.8±5.0 18.0±6.2 5.2±4.3 15.1±5.7 6.1±4.6 -0.53^{+0.27}_{−0.25} -0.08^{+0.27}_{−0.30} 0.29^{+0.43}_{−0.32} - - 0.9 37.6

TABLE 8 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

101 ≤65.7 - - - - - - - - - - - 1.1 ≤38.1 102 ≤3.8 - - - - - - - - - - - 2.2 ≤36.9 103 50.9±9.0 7.1±4.3 24.8±6.4 31.9±7.2 19.0±6.0 24.7±6.5 22.6±6.4 -0.11^{+0.16}_{−0.15} -0.47^{+0.25}_{−0.20} 0.15^{+0.15}_{−0.14} N P 0.3 38.0 104 ≤33.0 - - - - - - - - - - - 0.9 ≤37.8 105 ≤20.0 - - - - - - - - - - - 0.9 ≤37.6 106 ≤43.4 - - - - - - - - - - - 1.0 ≤37.9 107 ≤13.7 - - - - - - - - - - - 0.1 ≤37.5 108 45.3±8.4 8.2±4.3 28.6±6.6 36.7±7.5 8.6±4.6 31.8±7.0 13.2±5.2 -0.47^{+0.14}_{−0.13} -0.43^{+0.16}_{−0.21} 0.54^{+0.18}_{−0.19} N N 0.5 38.0 109 ≤13.9 - - - - - - - - - - - 0.6 ≤37.4 110 19.3±7.2 2.2±3.9 14.6±5.6 16.8±6.3 2.5±3.9 15.1±5.9 4.6±4.4 -0.65^{+0.18}_{−0.23} -0.56^{+0.40}_{−0.70} 0.64^{+0.67}_{−0.37} - - 2.1 37.6 111 13.4±6.5 4.6±4.1 9.5±5.0 14.2±6.0 -0.7±3.2 13.2±5.7 0.7±3.6 -0.91^{+0.12}_{−0.09} -0.19^{+0.38}_{−0.45} 0.84^{+0.99}_{−0.46} - - 1.9 37.4 112 ≤1.1 - - - - - - - - - - - 0.0 ≤36.3 113 15.5±6.2 9.1±4.6 8.8±4.6 18.0±6.0 -2.4±2.7 12.9±5.2 -0.9±3.2 -0.96^{+0.08}_{−0.04} 0.11^{+0.24}_{−0.24} 1.07^{+0.99}_{−0.54} - - 2.0 37.5 114 53.4±13.8 12.9±7.4 29.7±8.2 42.5±10.6 10.0±5.4 41.9±10.2 12.4±5.8 -0.61^{+0.15}_{−0.16} -0.29^{+0.30}_{−0.27} 0.52^{+0.20}_{−0.27} N N 1.1 38.0 115 2.1±5.1 -1.0±2.9 2.8±3.8 1.8±4.3 0.3±3.4 0.5±3.8 1.9±3.8 0.14^{+0.86}_{−0.04} -0.38^{+0.84}_{−1.07} 0.31^{+0.99}_{−0.84} - - 0.9 36.6 116 ≤35.8 - - - - - - - - - - - 0.9 ≤37.8 117 ± ± ± ± ± ± ± -0.62^{+0.01}_{−0.01} -0.08^{+0.01}_{−0.00} 0.60^{+0.01}_{−0.01} N P 6.7 40.4 118 73.3±11.1 12.5±5.7 42.6±8.1 55.1±9.5 18.1±6.1 48.2±8.9 21.5±6.6 -0.44^{+0.11}_{−0.14} -0.43^{+0.16}_{−0.22} 0.39^{+0.14}_{−0.15} N N 0.9 38.1 119 279.4±19.7 56.9±10.3 145.5±14.1 202.4±17.1 77.0±10.2 173.6±15.9100.5±11.5 -0.33^{+0.06}_{−0.06} -0.32^{+0.09}_{−0.08} 0.30^{+0.07}_{−0.06} N N 0.6 38.7 120 122.6±17.8 17.3±9.2 70.5±11.7 87.8±14.4 34.0±7.6 79.7±13.7 40.3±8.2 -0.39^{+0.10}_{−0.10} -0.45^{+0.19}_{−0.33} 0.33^{+0.13}_{−0.08} N N 1.2 38.4 121 22.4±6.5 5.5±3.8 10.9±4.7 16.4±5.6 5.9±4.1 16.5±5.4 6.3±4.3 -0.53^{+0.21}_{−0.21} -0.19^{+0.24}_{−0.27} 0.27^{+0.32}_{−0.24} N N 2.6 37.6 122 5.7±4.6 4.7±3.6 3.5±3.4 8.2±4.4 -2.5±2.3 7.3±4.1 -1.9±2.7 -0.96^{+0.09}_{−0.04} 0.19^{+0.43}_{−0.38} 0.76^{+1.07}_{−0.61} - - 0.9 37.1 123 ≤0.5 - - - - - - - - - - - 2.8 ≤36.0 124 ≤31.4 - - - - - - - - - - - 1.0 ≤37.8 125 19.5±5.8 1.3±2.7 9.3±4.3 10.6±4.6 8.9±4.3 9.9±4.4 9.8±4.4 -0.08^{+0.23}_{−0.23} -0.62^{+0.41}_{−0.61} 0.05^{+0.19}_{−0.21} - - 0.8 37.6 126 ≤11.8 - - - - - - - - - - - 0.2 ≤37.3 127 10.6±4.7 3.0±3.2 7.2±4.0 10.1±4.6 0.4±2.3 7.4±4.1 2.4±2.9 -0.58^{+0.22}_{−0.31} -0.24^{+0.32}_{−0.40} 0.84^{+0.84}_{−0.46} - - 0.7 37.3 128 ≤47.6 - - - - - - - - - - - 0.3 ≤38.0 129 ≤31.7 - - - - - - - - - - - 2.0 ≤37.8 130 ≤17.8 - - - - - - - - - - - 1.4 ≤37.5 131 13.2±5.0 4.4±3.4 6.5±3.8 10.9±4.6 2.3±2.9 10.1±4.4 2.2±2.9 -0.71^{+0.15}_{−0.23} -0.05^{+0.26}_{−0.30} 0.43^{+0.43}_{−0.38} N N 0.2 37.4 132 70.5±12.5 22.3±7.8 34.2±8.7 56.5±11.2 14.0±5.6 49.1±10.6 20.6±6.4 -0.46^{+0.13}_{−0.13} -0.09^{+0.17}_{−0.18} 0.43^{+0.15}_{−0.20} Y N 3.1 38.1 133 56.0±8.9 16.0±5.2 29.1±6.6 45.1±8.0 10.9±4.8 37.1±7.3 16.3±5.6 -0.45^{+0.13}_{−0.13} -0.12^{+0.09}_{−0.19} 0.44^{+0.19}_{−0.16} N N 1.3 38.0 134 18.4±5.6 5.6±3.6 7.6±4.0 13.2±4.8 5.3±3.6 13.3±4.8 5.2±3.6 -0.49^{+0.18}_{−0.22} -0.03^{+0.22}_{−0.26} 0.19^{+0.24}_{−0.27} - - 0.1 37.5 135 ≤23.6 - - - - - - - - - - - 1.7 ≤37.7 136 ≤6.4 - - - - - - - - - - - 0.0 ≤37.1 137 ≤34.4 - - - - - - - - - - - 2.0 ≤37.8 138 ≤24.8 - - - - - - - - - - - 0.6 ≤37.7 139 170.8±15.9 51.0±9.3 108.4±12.3 159.4±15.0 11.3±5.3 145.1±14.3 20.0±6.4 -0.79^{+0.06}_{−0.05} -0.23^{+0.08}_{−0.09} 1.00^{+0.20}_{−0.16} N N 9.3 38.5 140 59.0±9.7 9.6±4.9 27.7±6.8 37.3±7.9 21.8±6.2 35.7±7.7 22.1±6.3 -0.30^{+0.12}_{−0.15} -0.38^{+0.21}_{−0.19} 0.15^{+0.14}_{−0.14} Y N 1.3 38.0 141 28.3±7.4 10.0±4.8 18.3±5.8 28.4±7.1 0.0±3.2 22.7±6.4 1.3±3.6 -0.94^{+0.08}_{−0.06} -0.16^{+0.19}_{−0.22} 1.07^{+0.84}_{−0.46} N P 0.5 37.7 142 ≤7.9 - - - - - - - - - - - 0.4 ≤37.2 143 29.8±7.2 1.3±2.9 14.9±5.2 16.2±5.6 13.5±5.2 14.5±5.2 15.0±5.4 -0.05^{+0.18}_{−0.21} -0.68^{+0.35}_{−0.74} 0.03^{+0.21}_{−0.15} N N 0.9 37.8 144 ≤11.2 - - - - - - - - - - - 0.5 ≤37.3 145 ≤17.6 - - - - - - - - - - - 0.9 ≤37.5 146 288.8±18.5 52.0±8.8 155.1±13.7 207.2±15.9 81.6±10.2 179.8±14.9101.9±11.3 -0.34^{+0.06}_{−0.06} -0.38^{+0.07}_{−0.08} 0.30^{+0.07}_{−0.05} N Y 0.5 38.7 147 59.4±9.3 21.4±6.1 25.1±6.4 46.5±8.3 12.9±4.8 45.3±8.2 13.5±5.0 -0.58^{+0.09}_{−0.12} 0.03^{+0.14}_{−0.13} 0.33^{+0.14}_{−0.17} N P 2.0 38.1 148 66.7±11.0 17.5±5.6 30.3±6.9 47.8±8.4 18.8±6.0 41.8±7.9 22.4±6.4 -0.36^{+0.11}_{−0.14} -0.11^{+0.10}_{−0.18} 0.19^{+0.18}_{−0.11} N N 0.9 38.1 149 46.3±8.5 13.9±5.3 30.6±6.9 44.4±8.3 1.9±2.9 38.5±7.8 4.5±3.6 -0.82^{+0.08}_{−0.10} -0.26^{+0.17}_{−0.15} 1.10^{+0.52}_{−0.35} N N 1.8 37.9 150 ≤7.4 - - - - - - - - - - - 0.8 ≤37.1

TABLE 8 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

151 ≤10.2 - - - - - - - - - - - 0.8 ≤37.3 152 ≤3.2 - - - - - - - - - - - 0.0 ≤36.8 153 10.2±7.0 2.5±4.3 3.6±4.6 6.0±5.7 4.2±4.2 7.2±5.5 3.7±4.4 -0.41^{+0.25}_{−0.37} 0.00^{+0.80}_{−0.91} 0.00^{+0.70}_{−0.78} - - 1.3 37.3 154 60.1±9.3 14.5±5.3 33.9±7.1 48.4±8.4 11.7±4.7 39.2±7.7 18.3±5.6 -0.42^{+0.11}_{−0.13} -0.24^{+0.12}_{−0.18} 0.49^{+0.15}_{−0.16} N P 0.4 38.1 155 28.1±7.3 6.4±4.1 13.7±5.2 20.1±6.2 8.1±4.6 19.8±6.0 8.4±4.7 -0.47^{+0.19}_{−0.21} -0.21^{+0.24}_{−0.27} 0.24^{+0.24}_{−0.21} N N 0.3 37.7 156 ≤2.0 - - - - - - - - - - - 0.0 ≤36.6 157 67.5±10.0 10.9±4.8 41.2±7.8 52.1±8.7 15.4±5.6 45.2±8.2 19.0±6.0 -0.47^{+0.12}_{−0.12} -0.45^{+0.13}_{−0.21} 0.44^{+0.17}_{−0.12} N P 2.0 38.1 158 269.8±22.2 39.2±7.8 172.6±14.3 211.8±15.9 58.4±9.0 177.9±14.7 85.7±10.6 -0.41^{+0.05}_{−0.06} -0.55^{+0.08}_{−0.08} 0.49^{+0.08}_{−0.06} N N 1.3 38.7 159 ≤3.3 - - - - - - - - - - - 0.8 ≤36.8 160 20.0±6.8 4.7±4.0 9.6±4.8 14.3±5.8 5.7±4.3 11.1±5.2 6.9±4.6 -0.32^{+0.30}_{−0.30} -0.19^{+0.32}_{−0.37} 0.24^{+0.35}_{−0.32} N N 0.9 37.6 161 ≤2.2 - - - - - - - - - - - 0.0 ≤36.6 162 24.3±7.3 7.7±4.6 10.2±5.1 17.9±6.4 6.4±4.3 18.8±6.3 5.5±4.3 -0.63^{+0.21}_{−0.21} -0.03^{+0.27}_{−0.29} 0.21^{+0.33}_{−0.29} - - 0.5 37.7 163 134.0±16.5 31.4±7.1 65.6±9.4 97.0±11.4 37.0±7.5 80.9±10.5 48.5±8.4 -0.31^{+0.08}_{−0.09} -0.23^{+0.11}_{−0.09} 0.27^{+0.10}_{−0.09} N N 0.8 38.4 164 ≤6.1 - - - - - - - - - - - 1.5 ≤37.1 165 17.1±6.4 9.3±4.6 6.5±4.3 15.9±5.8 1.2±3.6 10.1±5.0 3.8±4.1 -0.60^{+0.20}_{−0.27} 0.21^{+0.30}_{−0.26} 0.46^{+0.85}_{−0.49} - - 0.7 37.5 166 15.3±6.4 5.6±4.0 3.4±4.0 8.9±5.1 6.4±4.4 8.5±4.8 5.6±4.4 -0.31^{+0.37}_{−0.37} 0.24^{+0.59}_{−0.45} -0.19^{+0.48}_{−0.61} - - 0.3 37.5 167 ≤10.5 - - - - - - - - - - - 0.6 ≤37.3 168 ≤10.5 - - - - - - - - - - - 0.8 ≤37.3 169 34.2±7.7 13.4±5.0 20.4±5.9 33.8±7.2 0.4±3.4 31.2±6.9 2.8±4.0 -0.90^{+0.07}_{−0.10} -0.09^{+0.16}_{−0.17} 1.07^{+0.76}_{−0.46} N Y 1.3 37.8 170 32.2±7.4 3.1±3.4 13.1±5.1 16.1±5.7 16.1±5.4 14.3±5.3 16.6±5.6 0.01^{+0.19}_{−0.21} -0.61^{+0.46}_{−0.32} -0.14^{+0.27}_{−0.09} N N 1.3 37.8 171 16.8±6.1 7.2±4.1 6.3±4.1 13.5±5.3 3.3±3.8 12.9±5.1 3.5±4.0 -0.70^{+0.15}_{−0.20} 0.13^{+0.33}_{−0.26} 0.24^{+0.56}_{−0.43} - - 0.1 37.5 172 ≤6.2 - - - - - - - - - - - 1.2 ≤37.1 173 ≤65.2 - - - - - - - - - - - 6.9 ≤38.1 174 ≤6.7 - - - - - - - - - - - 0.5 ≤37.1 175 13.6±5.9 5.4±4.0 5.8±4.1 11.1±5.2 2.5±3.6 6.3±4.4 4.0±4.0 -0.34^{+0.37}_{−0.43} 0.05^{+0.38}_{−0.34} 0.29^{+0.68}_{−0.48} - - 1.3 37.4 176 ≤9.7 - - - - - - - - - - - 0.8 ≤37.3 177 ≤7.4 - - - - - - - - - - - 1.7 ≤37.1 178 16.7±6.6 7.9±4.6 6.5±4.4 14.4±5.9 2.3±3.8 10.8±5.3 3.5±4.1 -0.64^{+0.17}_{−0.21} 0.16^{+0.35}_{−0.32} 0.35^{+0.75}_{−0.48} - - 1.8 37.5 179 24.8±7.2 6.8±4.3 13.9±5.4 20.7±6.5 4.1±4.0 14.9±5.7 7.1±4.6 -0.44^{+0.25}_{−0.24} -0.21^{+0.24}_{−0.27} 0.51^{+0.46}_{−0.32} N N 1.9 37.7 180 ≤13.5 - - - - - - - - - - - 1.5 ≤37.4 181 ≤17.5 - - - - - - - - - - - 1.6 ≤37.5 182 ≤13.7 - - - - - - - - - - - 0.2 ≤37.4 183 11.8±5.7 3.4±3.6 7.7±4.3 11.2±5.1 0.6±3.4 10.1±4.7 1.2±3.6 -0.85^{+0.15}_{−0.15} -0.21^{+0.34}_{−0.46} 0.61^{+0.84}_{−0.46} - - 0.1 37.4 184 230.0±16.5 40.9±7.6 128.5±12.5 169.4±14.2 60.6±9.0 138.7±12.9 82.1±10.3 -0.32^{+0.06}_{−0.07} -0.39^{+0.07}_{−0.09} 0.35^{+0.07}_{−0.06} N N 0.0 38.6 185 96.9±11.5 17.9±5.8 56.8±8.8 74.7±10.1 22.2±6.3 64.4±9.4 29.6±7.0 -0.43^{+0.10}_{−0.09} -0.39^{+0.12}_{−0.14} 0.43^{+0.12}_{−0.11} N N 0.9 38.3 186 14.3±6.1 6.8±4.3 8.6±4.6 15.4±5.8 -1.1±2.9 7.0±4.6 1.3±3.6 -0.74^{+0.21}_{−0.26} 0.00^{+0.27}_{−0.29} 0.92^{+0.91}_{−0.54} - - 0.3 37.4 187 36.8±8.1 9.6±4.7 19.8±6.0 29.5±7.1 7.3±4.6 28.3±6.9 8.7±4.8 -0.59^{+0.16}_{−0.17} -0.21^{+0.18}_{−0.19} 0.43^{+0.27}_{−0.22} N N 0.1 37.8 188 ≤2.6 - - - - - - - - - - - 0.0 ≤36.7 189 23.4±7.6 8.7±4.7 14.0±5.2 22.7±6.5 0.9±3.4 20.6±6.2 2.4±3.8 -0.88^{+0.10}_{−0.12} -0.11^{+0.22}_{−0.24} 0.83^{+0.81}_{−0.43} N N 1.4 37.6 190 20.1±6.7 4.2±3.8 8.2±4.6 12.5±5.4 7.6±4.6 6.4±4.4 12.8±5.3 0.30^{+0.29}_{−0.30} -0.16^{+0.35}_{−0.40} 0.05^{+0.30}_{−0.29} N N 1.2 37.6 191 16.4±6.3 3.8±3.8 10.1±4.7 13.8±5.6 2.6±3.8 15.8±5.6 2.0±3.8 -0.86^{+0.12}_{−0.14} -0.29^{+0.34}_{−0.43} 0.48^{+0.65}_{−0.37} - - 1.3 37.5 192 11.7±5.6 3.8±3.6 6.6±4.1 10.4±5.0 1.3±3.4 8.7±4.6 1.9±3.6 -0.76^{+0.18}_{−0.24} -0.13^{+0.37}_{−0.41} 0.48^{+0.81}_{−0.45} - - 2.0 37.3 193 ≤6.9 - - - - - - - - - - - 1.2 ≤37.1 194 89.6±11.9 23.9±6.3 50.9±8.3 74.8±10.0 15.2±5.4 61.4±9.1 23.8±6.4 -0.49^{+0.09}_{−0.10} -0.24^{+0.13}_{−0.10} 0.56^{+0.12}_{−0.16} N N 3.0 38.2 195 25.8±6.9 7.4±4.1 13.7±5.1 21.1±6.1 4.7±4.1 15.5±5.3 7.9±4.7 -0.41^{+0.23}_{−0.23} -0.16^{+0.21}_{−0.22} 0.46^{+0.40}_{−0.30} N N 0.8 37.7 196 ≤19.5 - - - - - - - - - - - 2.8 ≤37.6 197 ≤10.2 - - - - - - - - - - - 1.2 ≤37.3 198 ≤6.3 - - - - - - - - - - - 0.0 ≤37.1 199 ≤4.3 - - - - - - - - - - - 0.0 ≤36.9 200 ≤13.1 - - - - - - - - - - - 0.1 ≤37.5

TABLE 8 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

201 ≤2.2 - - - - - - - - - - - 0.0 ≤36.7 202 15.9±6.0 2.3±3.2 11.8±4.8 14.2±5.3 1.7±3.6 14.5±5.2 2.1±3.8 -0.84^{+0.12}_{−0.16} -0.51^{+0.35}_{−0.51} 0.67^{+0.72}_{−0.40} - - 0.5 37.5 203 14.5±5.7 3.6±3.4 7.1±4.1 10.7±4.8 3.8±3.8 9.0±4.4 5.4±4.1 -0.36^{+0.32}_{−0.30} -0.19^{+0.35}_{−0.35} 0.27^{+0.45}_{−0.38} - - 1.4 37.4 204 ≤1.2 - - - - - - - - - - - 0.0 ≤36.3 205 22.8±6.7 5.2±3.8 15.3±5.3 20.5±6.1 2.3±3.6 20.1±5.9 1.6±3.6 -0.92^{+0.09}_{−0.08} -0.35^{+0.24}_{−0.27} 0.70^{+0.64}_{−0.35} N N 1.4 37.6 206 9.3±5.3 2.2±3.2 3.5±3.6 5.7±4.3 3.6±3.8 6.4±4.1 2.8±3.8 -0.55^{+0.22}_{−0.23} -0.05^{+0.59}_{−0.70} 0.00^{+0.62}_{−0.56} - - 1.0 37.2 207 ≤2.2 - - - - - - - - - - - 0.0 ≤36.7 208 11.8±5.6 1.4±2.9 7.6±4.3 9.0±4.7 2.8±3.8 5.1±4.0 5.2±4.3 -0.09^{+0.45}_{−0.44} -0.48^{+0.45}_{−0.67} 0.38^{+0.59}_{−0.43} - - 0.3 37.4 209 44.5±8.4 0.1±2.7 25.8±6.5 25.9±6.6 18.6±5.9 16.4±5.6 27.8±6.8 0.20^{+0.17}_{−0.16} -1.30^{+0.55}_{−0.77} 0.16^{+0.15}_{−0.14} N P 0.8 37.9 210 ≤10.8 - - - - - - - - - - - 0.5 ≤37.3 211 ≤20.9 - - - - - - - - - - - 0.3 ≤37.6 212 ≤8.5 - - - - - - - - - - - 1.5 ≤37.2 213 23.2±6.7 9.1±4.4 5.9±4.0 14.9±5.4 8.2±4.6 11.2±4.8 8.7±4.7 -0.21^{+0.26}_{−0.26} 0.27^{+0.27}_{−0.27} -0.11^{+0.30}_{−0.29} N N 2.1 37.7 214 ≤7.0 - - - - - - - - - - - 1.0 ≤37.1 215 ≤17.0 - - - - - - - - - - - 1.8 ≤37.5 216 31.9±7.4 8.0±4.3 20.8±5.9 28.8±6.8 3.1±3.8 25.8±6.5 5.7±4.3 -0.70^{+0.16}_{−0.17} -0.32^{+0.19}_{−0.22} 0.75^{+0.54}_{−0.32} N N 1.9 37.8 217 ≤2.2 - - - - - - - - - - - 1.4 ≤36.6 218 ≤8.0 - - - - - - - - - - - 0.9 ≤37.2 219 9.8±5.5 2.5±3.4 4.7±3.8 7.2±4.6 2.6±3.8 5.8±4.1 3.9±4.1 -0.34^{+0.39}_{−0.39} -0.11^{+0.49}_{−0.64} 0.19^{+0.70}_{−0.51} - - 0.2 37.3 220 46.9±8.6 7.3±4.3 25.9±6.4 33.2±7.2 13.8±5.4 30.1±6.8 15.1±5.7 -0.39^{+0.15}_{−0.15} -0.47^{+0.23}_{−0.20} 0.30^{+0.17}_{−0.16} N P 1.4 38.0 221 ≤1.8 - - - - - - - - - - - 0.0 ≤36.6 222 ≤1.3 - - - - - - - - - - - 0.0 ≤36.4 223 ≤16.1 - - - - - - - - - - - 0.2 ≤37.5 224 ≤2.7 - - - - - - - - - - - 0.0 ≤36.8 225 53.2±8.9 13.9±5.1 30.6±6.7 44.4±8.0 8.8±4.7 41.4±7.7 10.6±5.0 -0.64^{+0.11}_{−0.13} -0.22^{+0.14}_{−0.16} 0.56^{+0.19}_{−0.21} N N 1.5 38.0 226 20.7±6.3 2.6±3.2 12.1±4.8 14.7±5.3 6.0±4.1 10.0±4.6 10.4±4.8 -0.07^{+0.25}_{−0.25} -0.48^{+0.32}_{−0.46} 0.32^{+0.30}_{−0.24} N N 2.1 37.6 227 53.1±9.1 17.4±5.4 23.1±6.1 40.4±7.7 12.3±5.1 35.7±7.2 17.8±5.8 -0.40^{+0.13}_{−0.13} -0.03^{+0.15}_{−0.14} 0.32^{+0.15}_{−0.19} N N 0.2 38.0 228 23.8±7.0 4.1±3.6 13.7±5.1 17.8±5.8 6.2±4.3 15.5±5.3 8.7±4.7 -0.36^{+0.22}_{−0.22} -0.38^{+0.27}_{−0.34} 0.35^{+0.29}_{−0.24} N N 0.1 37.7 229 38.7±7.8 11.5±4.7 20.4±5.8 31.9±7.0 6.8±4.3 26.9±6.5 9.4±4.7 -0.54^{+0.15}_{−0.16} -0.16^{+0.17}_{−0.16} 0.48^{+0.24}_{−0.21} N N 1.5 37.9 230 19.7±6.4 5.1±3.8 9.9±4.6 15.0±5.4 4.8±4.1 13.2±5.1 5.4±4.3 -0.51^{+0.26}_{−0.26} -0.19^{+0.27}_{−0.29} 0.29^{+0.41}_{−0.29} - - 1.5 37.6 231 27.6±7.0 6.9±4.1 13.9±5.1 20.8±6.1 6.8±4.3 17.4±5.6 9.2±4.7 -0.38^{+0.20}_{−0.20} -0.19^{+0.22}_{−0.24} 0.32^{+0.27}_{−0.21} N N 0.1 37.7 232 ≤16.0 - - - - - - - - - - - 2.1 ≤37.5 233 ≤18.6 - - - - - - - - - - - 0.5 ≤37.6 234 18.4±6.2 0.4±2.7 8.7±4.4 9.1±4.7 9.3±4.7 9.3±4.6 9.7±4.8 -0.06^{+0.28}_{−0.27} -0.69^{+0.46}_{−0.84} 0.00^{+0.24}_{−0.24} - - 1.0 37.6 235 ≤0.7 - - - - - - - - - - - 0.0 ≤36.1 236 ≤16.2 - - - - - - - - - - - 0.7 ≤37.5

NOTE. — Col. (1): Master ID, cols. (2)−(8): net counts, in each of the 7 energy bands (see Table 2 for definitions of these bands), col. (9): hardness ratio, cols. (10) and (11) color values, errors are given as 1σ, cols. (12) and (13): short-term variability, where (BB) indicate Bayesian block analysis and (K-S) indicates the Kolmogorov-Smirnov test, in both columns symbols indicate - (N) non-variable in all observations, (V) variable in at least one observation, (P) possible variability in at least one observation, col. (14): the significance of the change in L_X between the previous observation and the current observation respectively (equation 2), col. (15): log L_X (0.3−8.0 keV). Upper limit values of net B and L_X are at the 68% confidence level.

TABLE 9 SOURCE COUNTS, HARDNESS RATIOS, COLOR-COLOR VALUES AND VARIABILITY: OBSERVATION 5

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

1 49.4±9.0 0.4±3.2 13.1±5.1 13.6±5.6 35.8±7.5 10.6±4.8 37.1±7.7 0.51^{+0.15}_{−0.14} -0.76^{+0.47}_{−0.85} -0.38^{+0.14}_{−0.17} N N 0.4 38.0 2 129.3±13.2 22.1±6.3 79.4±10.2 101.5±11.5 27.8±7.1 83.1±10.4 44.1±8.4 -0.36^{+0.08}_{−0.09} -0.45^{+0.11}_{−0.12} 0.48^{+0.11}_{−0.11} N N 1.3 38.4 3 ≤2.3 - - - - - - - - - - - 0.0 ≤36.6 4 76.2±10.6 22.0±6.2 41.7±7.8 63.7±9.5 12.6±5.6 53.7±8.7 18.9±6.3 -0.53^{+0.11}_{−0.12} -0.19^{+0.14}_{−0.10} 0.53^{+0.19}_{−0.16} N N 1.9 38.2 5 204.7±15.8 49.8±8.4 118.2±12.0 168.0±14.3 36.7±7.6 140.7±13.1 54.1±8.9 -0.49^{+0.06}_{−0.07} -0.28^{+0.08}_{−0.07} 0.53^{+0.09}_{−0.09} N N 2.7 38.6 6 ≤1.8 - - - - - - - - - - - 1.2 ≤36.5 7 ≤2.1 - - - - - - - - - - - 0.0 ≤36.6 8 26.4±7.4 6.0±4.1 16.9±5.6 22.9±6.5 3.5±4.4 23.5±6.3 2.8±4.4 -0.88^{+0.11}_{−0.12} -0.32^{+0.21}_{−0.30} 0.59^{+0.59}_{−0.35} N N 0.1 37.7 9 21.2±7.1 6.3±4.3 12.5±5.1 18.8±6.2 2.4±4.3 19.3±5.9 2.5±4.4 -0.87^{+0.12}_{−0.13} -0.19^{+0.24}_{−0.29} 0.56^{+0.70}_{−0.40} N N 2.3 37.6 10 ≤7.3 - - - - - - - - - - - 0.0 ≤37.1 11 ≤19.8 - - - - - - - - - - - 0.3 ≤37.6 12 ≤4.1 - - - - - - - - - - - 0.0 ≤36.9 13 207.0±15.9 56.3±8.8 107.0±11.6 163.3±14.1 43.7±8.1 141.7±13.1 57.8±9.1 -0.47^{+0.06}_{−0.07} -0.17^{+0.05}_{−0.09} 0.40^{+0.10}_{−0.07} N N 1.8 38.6 14 62.5±9.7 19.4±5.8 27.5±6.6 46.9±8.3 15.7±5.7 43.4±7.9 16.7±5.9 -0.50^{+0.12}_{−0.12} -0.06^{+0.14}_{−0.13} 0.26^{+0.15}_{−0.16} Y N 0.7 38.1 15 10.9±5.4 1.4±2.9 7.2±4.1 8.6±4.6 2.3±3.6 8.0±4.3 2.9±3.8 -0.61^{+0.19}_{−0.21} -0.46^{+0.46}_{−0.69} 0.40^{+0.65}_{−0.43} - - 0.2 37.4 16 18.4±6.3 2.7±3.4 5.0±3.8 7.8±4.6 10.6±5.0 4.8±3.8 11.9±5.2 0.39^{+0.30}_{−0.28} -0.13^{+0.45}_{−0.57} -0.27^{+0.27}_{−0.32} - - 2.6 37.5 17 35.1±8.2 3.6±3.8 17.1±5.7 20.7±6.4 14.4±5.8 21.2±6.1 15.1±6.0 -0.24^{+0.17}_{−0.21} -0.52^{+0.32}_{−0.47} 0.08^{+0.20}_{−0.17} N P 0.1 37.8 18 ≤2.7 - - - - - - - - - - - 0.0 ≤36.7 19 9.0±5.4 -0.6±2.7 6.0±4.0 5.4±4.3 3.6±4.0 6.3±4.1 4.2±4.1 -0.34^{+0.40}_{−0.37} -0.69^{+0.54}_{−0.91} 0.21^{+0.54}_{−0.42} - - 1.3 37.2 20 ≤3.9 - - - - - - - - - - - 0.0 ≤36.9 21 ≤11.4 - - - - - - - - - - - 0.4 ≤37.4 22 9.5±5.4 5.3±4.0 4.0±3.6 9.3±4.8 0.2±3.2 7.0±4.3 0.0±3.2 -0.88^{+0.16}_{−0.12} 0.19^{+0.43}_{−0.40} 0.46^{+0.92}_{−0.61} - - 0.3 37.2 23 ≤2.9 - - - - - - - - - - - 1.8 ≤36.7 24 5.2±4.9 4.4±3.6 1.0±3.2 5.3±4.3 -0.1±3.2 4.8±4.0 -0.7±3.2 -0.83^{+0.21}_{−0.17} 0.46^{+0.85}_{−0.54} 0.15^{+1.07}_{−0.99} - - 0.4 37.0 25 ≤1.6 - - - - - - - - - - - 2.7 ≤36.5 26 24.3±6.7 0.6±2.7 13.1±5.0 13.6±5.2 10.7±4.8 11.9±4.8 11.3±5.0 -0.09^{+0.23}_{−0.23} -0.84^{+0.38}_{−0.84} 0.10^{+0.21}_{−0.19} N N 0.5 37.6 27 22.9±6.7 2.8±3.4 12.7±5.0 15.5±5.6 7.4±4.4 13.3±5.1 8.7±4.7 -0.28^{+0.24}_{−0.24} -0.48^{+0.35}_{−0.49} 0.24^{+0.27}_{−0.21} N N 2.6 37.6 28 ≤10.0 - - - - - - - - - - - 0.7 ≤37.3 29 23.2±6.7 3.5±3.4 13.5±5.1 17.0±5.7 6.2±4.3 15.4±5.3 6.7±4.4 -0.48^{+0.23}_{−0.23} -0.43^{+0.27}_{−0.37} 0.32^{+0.30}_{−0.24} N P 0.2 37.6 30 17.4±6.0 5.5±3.8 7.0±4.1 12.6±5.1 4.8±4.0 6.8±4.1 8.4±4.6 0.04^{+0.30}_{−0.31} 0.00^{+0.27}_{−0.29} 0.16^{+0.38}_{−0.32} - - 2.2 37.5 31 121.3±12.4 30.2±6.7 66.0±9.3 96.2±11.0 25.1±6.5 78.6±10.0 36.6±7.5 -0.42^{+0.09}_{−0.08} -0.23^{+0.09}_{−0.11} 0.43^{+0.12}_{−0.09} N N 1.6 38.3 32 ≤0.9 - - - - - - - - - - - 0.0 ≤36.2 33 ≤3.0 - - - - - - - - - - - 1.3 ≤36.7 34 3.2±4.6 2.6±3.4 0.8±2.9 3.5±4.0 -0.3±3.2 0.5±2.9 0.1±3.4 -0.06^{+0.31}_{−0.94} 0.31^{+0.99}_{−0.69} 0.08^{+1.07}_{−1.00} - - 0.7 36.8 35 41.0±8.1 8.0±4.3 19.8±5.8 27.7±6.7 13.3±5.2 26.4±6.5 15.7±5.6 -0.32^{+0.15}_{−0.17} -0.30^{+0.21}_{−0.20} 0.17^{+0.19}_{−0.14} N N 1.1 37.9 36 13.9±5.9 3.4±3.6 11.8±4.8 15.2±5.6 -1.4±2.9 15.2±5.3 -2.0±2.9 -0.98^{+0.04}_{−0.02} -0.38^{+0.30}_{−0.45} 1.07^{+0.92}_{−0.54} - - 0.6 37.4 37 ≤2.0 - - - - - - - - - - - 0.0 ≤36.6 38 ≤9.1 - - - - - - - - - - - 0.6 ≤37.2 39 26.3±4.4 5.0±3.6 14.8±5.1 19.8±5.8 7.0±4.1 16.6±5.3 9.7±4.6 -0.32^{+0.18}_{−0.20} -0.35^{+0.22}_{−0.27} 0.32^{+0.24}_{−0.19} N P 3.4 37.7 40 26.4±4.4 4.9±3.6 14.9±5.1 19.8±5.8 7.1±4.1 16.6±5.3 8.8±4.4 -0.37^{+0.19}_{−0.20} -0.35^{+0.22}_{−0.27} 0.32^{+0.24}_{−0.19} N N 0.7 37.7 41 157.7±14.0 31.2±6.9 89.7±10.6 120.9±12.3 36.8±7.5 102.0±11.3 51.1±8.5 -0.39^{+0.07}_{−0.08} -0.37^{+0.10}_{−0.09} 0.41^{+0.10}_{−0.08} N N 0.6 38.5 42 101.6±11.5 17.3±5.4 52.9±8.5 70.2±9.6 31.4±7.0 65.5±9.3 33.0±7.1 -0.39^{+0.09}_{−0.09} -0.39^{+0.14}_{−0.11} 0.26^{+0.10}_{−0.10} N P 1.0 38.3 43 39.0±7.9 8.3±4.3 21.3±5.9 29.6±6.8 9.4±4.7 28.0±6.5 10.8±5.0 -0.50^{+0.15}_{−0.16} -0.29^{+0.16}_{−0.22} 0.38^{+0.18}_{−0.19} N N 2.7 37.9 44 ≤2.3 - - - - - - - - - - - 1.6 ≤36.6 45 9.8±5.4 1.1±2.9 4.6±3.8 5.7±4.3 4.1±4.0 3.3±3.6 6.5±4.4 0.32^{+0.42}_{−0.39} -0.31^{+0.54}_{−0.84} 0.05^{+0.51}_{−0.45} - - 0.2 37.2 46 14.0±5.9 1.0±3.2 9.9±4.6 10.9±5.1 3.1±3.8 8.6±4.6 5.7±4.3 -0.30^{+0.34}_{−0.33} -0.61^{+0.46}_{−0.77} 0.46^{+0.53}_{−0.38} - - 1.7 37.4 47 ≤2.3 - - - - - - - - - - - 0.0 ≤36.6 48 10.4±3.5 2.3±3.2 5.2±3.8 7.5±4.4 2.5±3.4 7.7±4.3 3.1±3.6 -0.55^{+0.24}_{−0.31} -0.19^{+0.43}_{−0.59} 0.27^{+0.59}_{−0.43} N N 0.9 37.3

TABLE 9 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

49 ≤14.1 - - - - - - - - - - - 1.3 ≤37.4 50 41.8±8.1 8.4±4.3 24.9±6.3 33.2±7.1 8.5±4.6 26.9±6.5 12.7±5.2 -0.42^{+0.15}_{−0.16} -0.38^{+0.19}_{−0.18} 0.46^{+0.24}_{−0.17} N N 1.1 38.0 51 ≤14.4 - - - - - - - - - - - 0.7 ≤37.4 52 ≤15.0 - - - - - - - - - - - 0.2 ≤37.4 53 11.6±3.9 3.5±3.6 3.9±3.6 7.3±4.6 5.1±4.0 3.8±3.8 6.7±4.3 0.27^{+0.39}_{−0.42} 0.05^{+0.49}_{−0.53} -0.08^{+0.43}_{−0.43} N P 0.2 37.3 54 ≤13.4 - - - - - - - - - - - 1.1 ≤37.4 55 ≤10.2 - - - - - - - - - - - 0.2 ≤37.3 56 29.8±7.5 6.3±4.3 17.0±5.6 23.3±6.5 6.5±4.4 19.6±6.0 9.7±5.0 -0.41^{+0.20}_{−0.20} -0.32^{+0.24}_{−0.27} 0.40^{+0.30}_{−0.24} N N 3.0 37.7 57 16.9±6.2 2.4±3.4 7.7±4.3 10.2±5.0 6.8±4.4 10.5±4.8 6.4±4.4 -0.34^{+0.31}_{−0.29} -0.32^{+0.40}_{−0.59} 0.08^{+0.30}_{−0.29} - - 0.8 37.5 58 4.1±4.9 2.5±3.4 0.8±3.2 3.3±4.1 0.8±3.4 2.3±3.6 1.1±3.6 -0.29^{+0.23}_{−0.71} 0.31^{+0.99}_{−0.77} 0.00^{+0.99}_{−0.99} - - 0.8 36.9 59 19.8±6.8 2.3±3.6 16.4±5.6 18.7±6.2 1.1±3.6 15.7±5.7 4.5±4.3 -0.66^{+0.19}_{−0.22} -0.62^{+0.35}_{−0.67} 0.86^{+0.78}_{−0.43} - - 2.9 37.6 60 16.5±5.9 5.6±3.8 7.2±4.1 12.8±5.1 3.7±3.8 8.8±4.4 5.4±4.1 -0.34^{+0.33}_{−0.31} -0.03^{+0.30}_{−0.26} 0.27^{+0.45}_{−0.38} - - 1.4 37.5 61 ≤3.8 - - - - - - - - - - - 0.0 ≤36.8 62 ≤8.3 - - - - - - - - - - - 1.5 ≤37.2 63 43.2±8.3 8.0±4.3 27.7±6.5 35.7±7.4 7.5±4.6 32.7±7.1 9.1±4.8 -0.62^{+0.14}_{−0.15} -0.43^{+0.16}_{−0.21} 0.56^{+0.27}_{−0.18} N N 1.7 37.9 64 ≤5.8 - - - - - - - - - - - 1.3 ≤37.0 65 22.9±6.2 6.0±3.8 14.1±5.0 20.1±5.8 2.8±3.2 15.6±5.2 4.7±3.6 -0.59^{+0.17}_{−0.20} -0.27^{+0.22}_{−0.21} 0.67^{+0.38}_{−0.32} N N 0.4 37.6 66 34.1±7.1 6.0±3.8 21.2±5.8 27.2±6.5 6.9±4.0 24.8±6.2 7.8±4.1 -0.57^{+0.13}_{−0.15} -0.43^{+0.19}_{−0.21} 0.51^{+0.19}_{−0.22} N N 0.4 37.8 67 28.5±7.1 3.4±3.4 15.6±5.3 19.0±5.9 9.6±4.7 14.3±5.2 11.7±5.1 -0.17^{+0.20}_{−0.23} -0.51^{+0.27}_{−0.40} 0.24^{+0.19}_{−0.21} N N 1.3 37.7 68 40.8±8.3 13.1±5.1 21.4±6.1 34.5±7.5 6.3±4.4 28.7±6.8 8.6±4.8 -0.60^{+0.16}_{−0.16} -0.11^{+0.17}_{−0.17} 0.53^{+0.31}_{−0.25} N N 0.6 37.9 69 15.4±5.9 1.7±3.2 9.9±4.6 11.6±5.1 3.8±3.8 10.5±4.7 6.2±4.3 -0.35^{+0.29}_{−0.28} -0.51^{+0.40}_{−0.67} 0.38^{+0.45}_{−0.33} - - 0.5 37.4 70 ≤1.5 - - - - - - - - - - - 3.0 ≤36.4 71 30.0±7.2 6.5±4.0 14.0±5.1 20.6±6.0 9.4±4.7 15.8±5.3 12.7±5.2 -0.18^{+0.21}_{−0.20} -0.21^{+0.21}_{−0.25} 0.19^{+0.21}_{−0.19} N N 0.4 37.7 72 65.3±9.6 19.1±5.7 26.0±6.4 45.2±8.1 20.1±6.0 40.7±7.6 23.5±6.4 -0.33^{+0.12}_{−0.12} -0.05^{+0.14}_{−0.13} 0.14^{+0.13}_{−0.14} N N 0.5 38.1 73 15.8±3.8 3.1±3.4 10.3±4.6 13.5±5.2 3.8±3.6 11.4±4.8 4.5±3.8 -0.52^{+0.25}_{−0.26} -0.38^{+0.33}_{−0.42} 0.40^{+0.40}_{−0.29} N N 2.1 37.5 74 8.5±3.2 1.4±2.9 4.8±3.6 6.2±4.1 2.8±3.4 5.2±3.8 3.5±3.6 -0.32^{+0.39}_{−0.40} -0.29^{+0.48}_{−0.70} 0.21^{+0.51}_{−0.42} - - 0.8 37.2 75 ≤1.2 - - - - - - - - - - - 2.0 ≤36.3 76 57.0±9.5 14.7±5.4 33.2±7.1 48.0±8.5 9.1±4.8 44.2±8.1 11.4±5.2 -0.64^{+0.12}_{−0.12} -0.26^{+0.15}_{−0.16} 0.60^{+0.19}_{−0.22} N N 0.2 38.0 77 ≤1.6 - - - - - - - - - - - 0.0 ≤36.5 78 62.4±9.5 19.2±5.7 32.1±6.9 51.3±8.5 11.1±5.1 43.2±7.8 16.9±5.8 -0.49^{+0.11}_{−0.13} -0.11^{+0.12}_{−0.14} 0.50^{+0.16}_{−0.20} N N 0.5 38.1 79 ≤9.2 - - - - - - - - - - - 5.9 ≤37.2 80 ≤10.7 - - - - - - - - - - - 0.6 ≤37.3 81 ≤21.1 - - - - - - - - - - - 0.8 ≤37.6 82 ≤11.9 - - - - - - - - - - - 0.9 ≤37.3 83 ≤10.0 - - - - - - - - - - - 10.8 ≤37.3 84 ≤35.9 - - - - - - - - - - - 2.4 ≤37.8 85 33.6±5.0 9.5±4.6 19.8±5.8 29.4±6.9 3.3±3.4 28.0±6.6 4.8±3.8 -0.75^{+0.12}_{−0.14} -0.21^{+0.18}_{−0.19} 0.75^{+0.40}_{−0.29} N P 0.5 37.8 86 ≤11.8 - - - - - - - - - - - 1.8 ≤37.3 87 ≤15.0 - - - - - - - - - - - 0.4 ≤37.4 88 ≤24.5 - - - - - - - - - - - 0.5 ≤37.6 89 6.8±5.0 0.9±2.9 5.6±4.0 6.5±4.4 0.3±3.2 3.9±3.8 0.7±3.4 -0.63^{+0.29}_{−0.37} -0.38^{+0.46}_{−0.84} 0.53^{+1.00}_{−0.53} - - 1.2 37.1 90 ≤1.5 - - - - - - - - - - - 0.0 ≤36.4 91 ≤6.0 - - - - - - - - - - - 7.4 ≤37.0 92 8.8±3.3 1.0±2.9 4.9±3.8 5.9±4.3 3.5±3.6 6.0±4.1 3.1±3.6 -0.45^{+0.28}_{−0.38} -0.38^{+0.53}_{−0.77} 0.16^{+0.48}_{−0.43} - - 1.9 37.2 93 ≤6.6 - - - - - - - - - - - 0.0 ≤37.1 94 ≤3.3 - - - - - - - - - - - 1.2 ≤36.8 95 ≤11.0 - - - - - - - - - - - 1.6 ≤37.3 96 212.0±16.0 39.5±7.6 121.2±12.2 160.7±14.0 51.3±8.5 142.1±13.2 63.4±9.4 -0.44^{+0.06}_{−0.07} -0.37^{+0.06}_{−0.10} 0.41^{+0.07}_{−0.08} N N 1.1 38.6 97 17.6±6.0 4.6±3.6 9.2±4.4 13.8±5.2 3.7±3.8 9.8±4.6 6.2±4.3 -0.31^{+0.29}_{−0.29} -0.19^{+0.27}_{−0.29} 0.35^{+0.45}_{−0.32} - - 2.1 37.6 98 29.8±5.1 4.7±4.1 14.8±5.3 19.5±6.3 9.9±4.6 18.6±6.0 11.5±4.9 -0.30^{+0.19}_{−0.20} -0.35^{+0.30}_{−0.40} 0.20^{+0.20}_{−0.20} N P 3.0 37.7 99 52.4±9.2 16.9±5.8 27.5±6.7 44.4±8.4 8.0±4.4 37.2±7.8 13.3±5.2 -0.52^{+0.12}_{−0.14} -0.12^{+0.15}_{−0.15} 0.54^{+0.22}_{−0.19} N N 0.2 38.0

TABLE 9 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

100 14.3±4.0 0.8±3.2 9.9±4.6 10.8±5.1 4.1±3.6 7.3±4.6 6.9±4.1 -0.07^{+0.32}_{−0.37} -0.61^{+0.46}_{−0.77} 0.38^{+0.37}_{−0.30} N N 1.2 37.4 101 34.2±7.9 10.9±5.1 14.1±5.4 25.0±7.0 9.2±4.4 19.5±6.4 10.7±4.7 -0.35^{+0.18}_{−0.20} -0.04^{+0.25}_{−0.18} 0.21^{+0.21}_{−0.22} N N 1.9 37.8 102 ≤2.6 - - - - - - - - - - - 0.0 ≤36.7 103 27.8±7.3 6.4±4.1 12.9±5.1 19.3±6.1 8.5±4.7 17.2±5.7 9.5±5.0 -0.36^{+0.22}_{−0.21} -0.19^{+0.24}_{−0.27} 0.19^{+0.24}_{−0.22} N N 2.1 37.7 104 34.2±7.7 11.2±5.1 17.9±5.7 29.1±7.2 5.1±3.8 25.1±6.7 7.0±4.1 -0.61^{+0.14}_{−0.16} -0.12^{+0.19}_{−0.19} 0.58^{+0.24}_{−0.29} N N 0.6 37.8 105 ≤15.1 - - - - - - - - - - - 0.8 ≤37.4 106 ≤39.1 - - - - - - - - - - - 0.5 ≤37.8 107 11.1±5.8 4.6±3.8 7.7±4.4 12.3±5.3 -1.2±3.2 11.3±5.0 0.1±3.6 -0.92^{+0.12}_{−0.08} -0.11^{+0.32}_{−0.37} 0.84^{+0.92}_{−0.53} - - 0.0 37.3 108 17.4±6.2 5.5±4.0 9.6±4.6 15.1±5.6 2.2±3.6 13.7±5.2 2.7±3.8 -0.79^{+0.13}_{−0.21} -0.13^{+0.26}_{−0.30} 0.54^{+0.64}_{−0.41} - - 3.0 37.5 109 10.9±4.0 4.8±4.0 5.8±4.2 10.7±5.3 0.7±3.0 9.1±4.9 1.2±3.2 -0.83^{+0.15}_{−0.17} 0.03^{+0.40}_{−0.46} 0.53^{+0.92}_{−0.45} - - 0.4 37.3 110 30.5±8.1 4.6±4.3 17.4±5.9 22.0±6.9 8.5±4.8 20.1±6.4 11.2±5.3 -0.36^{+0.20}_{−0.22} -0.43^{+0.32}_{−0.46} 0.32^{+0.27}_{−0.21} N N 0.9 37.7 111 23.7±7.3 7.0±4.4 16.0±5.6 23.0±6.6 0.8±3.6 22.6±6.5 0.8±3.8 -0.95^{+0.07}_{−0.05} -0.24^{+0.24}_{−0.30} 0.86^{+0.86}_{−0.40} N N 1.0 37.6 112 3.4±5.1 -1.6±1.9 -0.8±2.3 -2.5±2.3 5.8±4.3 -2.3±1.9 6.5±4.4 0.96^{+0.04}_{−0.09} -0.08^{+1.15}_{−1.14} -0.84^{+0.61}_{−0.99} - - 0.7 36.8 113 ≤1.7 - - - - - - - - - - - 2.4 ≤36.5 114 41.5±6.1 8.9±5.4 23.8±6.7 32.7±8.1 9.4±4.6 28.4±7.6 12.0±5.0 -0.46^{+0.15}_{−0.17} -0.28^{+0.22}_{−0.31} 0.43^{+0.19}_{−0.21} N N 0.9 37.9 115 6.7±5.5 0.7±3.4 5.6±4.1 6.4±4.8 0.3±3.4 6.3±4.6 -0.6±3.4 -0.85^{+0.19}_{−0.15} -0.38^{+0.53}_{−0.84} 0.53^{+0.92}_{−0.53} - - 0.6 37.1 116 ≤7.2 - - - - - - - - - - - 3.0 ≤37.1 117 7200.9±86.4 2734.7±53.7 3689.3±62.0 6424.1±81.6 776.8±29.1 5592.5±76.21134.2±34.9 -0.70^{+0.01}_{−0.01} -0.04^{+0.01}_{−0.01} 0.71^{+0.01}_{−0.02} N P 53.1 40.1 118 77.0±10.3 19.1±5.8 46.9±8.1 66.0±9.5 11.0±4.7 57.1±8.9 16.8±5.5 -0.59^{+0.09}_{−0.10} -0.27^{+0.10}_{−0.15} 0.67^{+0.14}_{−0.17} N N 0.0 38.1 119 252.1±18.3 41.3±8.8 153.8±14.2 195.1±16.3 57.1±8.9 175.3±15.5 71.1±9.8 -0.48^{+0.05}_{−0.06} -0.47^{+0.08}_{−0.10} 0.45^{+0.08}_{−0.06} N N 1.5 38.7 120 95.7±13.4 24.3±8.0 51.1±9.6 75.4±12.0 20.3±6.2 72.9±11.6 21.3±6.5 -0.60^{+0.09}_{−0.11} -0.22^{+0.15}_{−0.15} 0.42^{+0.15}_{−0.12} N N 1.4 38.2 121 6.3±2.9 2.1±2.9 4.0±3.4 6.0±4.0 0.7±2.9 5.6±3.8 1.6±3.2 -0.69^{+0.21}_{−0.31} -0.13^{+0.45}_{−0.54} 0.46^{+0.84}_{−0.54} - - 2.3 37.1 122 ≤2.0 - - - - - - - - - - - 1.2 ≤36.6 123 70.6±10.7 23.1±6.8 31.8±7.5 54.9±9.7 15.7±5.3 43.5±8.8 23.0±6.2 -0.37^{+0.12}_{−0.13} -0.07^{+0.15}_{−0.13} 0.33^{+0.15}_{−0.15} N N 6.6 38.1 124 41.5±8.8 18.0±6.2 20.4±6.2 38.5±8.3 3.0±3.6 36.1±7.9 5.4±4.1 -0.79^{+0.11}_{−0.13} 0.02^{+0.19}_{−0.15} 0.76^{+0.52}_{−0.35} N N 1.4 37.9 125 14.4±3.6 2.4±3.2 9.5±4.4 11.9±5.0 2.0±3.2 8.8±4.4 4.7±3.8 -0.39^{+0.29}_{−0.31} -0.43^{+0.38}_{−0.51} 0.59^{+0.59}_{−0.40} N N 0.9 37.4 126 5.4±3.0 0.7±2.9 2.2±3.2 2.9±3.8 2.5±3.4 3.1±3.6 3.1±3.6 -0.07^{+0.45}_{−0.56} -0.15^{+0.76}_{−0.92} -0.03^{+0.73}_{−0.72} - - 0.4 37.0 127 9.8±4.2 4.1±4.2 4.5±4.2 8.6±5.4 1.2±3.0 9.8±5.3 1.3±3.2 -0.83^{+0.15}_{−0.17} 0.05^{+0.62}_{−0.61} 0.43^{+0.86}_{−0.67} - - 0.2 37.2 128 ≤29.2 - - - - - - - - - - - 1.7 ≤37.7 129 ≤25.7 - - - - - - - - - - - 0.8 ≤37.7 130 10.7±6.0 0.9±3.4 10.3±4.8 11.2±5.5 -0.6±3.2 11.2±5.2 -0.4±3.4 -0.93^{+0.10}_{−0.07} -0.61^{+0.46}_{−0.77} 0.92^{+0.84}_{−0.54} - - 0.3 37.3 131 ≤1.4 - - - - - - - - - - - 2.6 ≤36.4 132 65.5±11.1 24.8±7.3 31.7±7.8 56.5±10.2 9.0±4.7 50.4±9.7 11.0±5.1 -0.69^{+0.10}_{−0.11} -0.05^{+0.18}_{−0.11} 0.55^{+0.23}_{−0.19} N N 0.5 38.1 133 82.1±10.5 19.4±5.7 36.5±7.3 55.8±8.8 26.3±6.5 50.8±8.4 29.9±6.9 -0.32^{+0.10}_{−0.11} -0.16^{+0.11}_{−0.15} 0.16^{+0.14}_{−0.10} N N 1.6 38.2 134 13.3±5.0 4.5±3.4 6.5±3.8 10.9±4.6 2.4±2.9 11.3±4.6 2.2±2.9 -0.73^{+0.14}_{−0.22} -0.05^{+0.26}_{−0.27} 0.40^{+0.43}_{−0.32} - - 0.8 37.4 135 ≤31.6 - - - - - - - - - - - 0.7 ≤37.8 136 ≤3.4 - - - - - - - - - - - 0.0 ≤36.8 137 ≤19.0 - - - - - - - - - - - 1.9 ≤37.5 138 ≤15.8 - - - - - - - - - - - 1.2 ≤37.5 139 ≤4.5 - - - - - - - - - - - 10.4 ≤36.9 140 29.1±4.8 9.5±4.6 14.1±5.1 23.7±6.4 5.9±4.0 22.9±6.2 6.6±4.1 -0.61^{+0.16}_{−0.17} -0.08^{+0.19}_{−0.21} 0.38^{+0.26}_{−0.22} N N 2.9 37.7 141 19.0±6.7 3.8±3.8 15.1±5.4 18.9±6.2 0.0±3.4 20.8±6.2 -0.8±3.4 -0.98^{+0.06}_{−0.02} -0.46^{+0.33}_{−0.43} 0.92^{+0.91}_{−0.39} - - 1.0 37.5 142 ≤13.9 - - - - - - - - - - - 0.6 ≤37.4 143 19.0±6.3 -0.5±2.3 8.4±4.4 7.9±4.6 11.1±5.0 5.2±4.0 13.4±5.3 0.41^{+0.27}_{−0.28} -0.92^{+0.54}_{−0.91} -0.08^{+0.21}_{−0.24} - - 1.4 37.5 144 ≤11.5 - - - - - - - - - - - 0.0 ≤37.3 145 ≤5.3 - - - - - - - - - - - 1.5 ≤37.0 146 308.3±19.2 59.1±9.2 183.0±14.9 242.0±17.1 66.3±9.4 214.9±16.1 88.7±10.7 -0.47^{+0.05}_{−0.05} -0.40^{+0.07}_{−0.07} 0.47^{+0.07}_{−0.06} N Y 0.2 38.7 147 52.7±9.0 13.8±5.3 33.0±7.1 46.8±8.5 5.9±4.0 39.1±7.8 11.5±4.8 -0.59^{+0.11}_{−0.13} -0.30^{+0.18}_{−0.14} 0.75^{+0.25}_{−0.22} N Y 0.7 38.0 148 72.3±9.8 17.9±5.4 34.8±7.1 52.6±8.5 19.6±5.7 41.4±7.6 26.3±6.4 -0.29^{+0.10}_{−0.13} -0.20^{+0.13}_{−0.13} 0.27^{+0.14}_{−0.11} N N 0.1 38.1 149 ≤5.1 - - - - - - - - - - - 4.7 ≤37.0

TABLE 9 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

150 ≤9.4 - - - - - - - - - - - 0.3 ≤37.2 151 ≤10.5 - - - - - - - - - - - 0.2 ≤37.3 152 22.5±6.1 15.2±5.1 5.3±3.6 20.5±5.8 2.0±2.9 16.9±5.3 1.9±2.9 -0.86^{+0.08}_{−0.14} 0.51^{+0.24}_{−0.22} 0.38^{+0.53}_{−0.41} N N 3.3 37.6 153 ≤5.3 - - - - - - - - - - - 1.2 ≤37.0 154 45.0±8.5 12.5±5.1 19.1±5.8 31.6±7.2 13.3±5.1 28.5±6.9 16.3±5.4 -0.33^{+0.13}_{−0.17} -0.09^{+0.18}_{−0.18} 0.18^{+0.17}_{−0.16} N N 1.4 37.9 155 20.4±6.6 7.5±4.3 9.8±4.7 17.2±5.9 3.1±3.8 10.4±5.0 5.7±4.3 -0.39^{+0.31}_{−0.31} -0.03^{+0.27}_{−0.24} 0.43^{+0.56}_{−0.35} N N 0.9 37.6 156 ≤1.5 - - - - - - - - - - - 0.0 ≤36.4 157 36.3±5.2 7.2±4.1 21.2±5.9 28.4±6.7 7.6±4.3 25.1±6.4 10.4±4.7 -0.47^{+0.15}_{−0.17} -0.35^{+0.19}_{−0.21} 0.46^{+0.21}_{−0.19} N N 2.9 37.8 158 161.8±9.7 31.5±6.9 98.2±11.0 129.7±12.6 31.4±6.9 109.6±11.7 46.1±8.1 -0.46^{+0.06}_{−0.08} -0.38^{+0.08}_{−0.11} 0.53^{+0.09}_{−0.09} N N 4.8 38.5 159 ≤4.8 - - - - - - - - - - - 0.7 ≤37.0 160 33.1±7.8 7.0±4.3 21.8±6.2 28.8±7.1 4.3±4.1 24.0±6.5 7.1±4.7 -0.62^{+0.19}_{−0.18} -0.38^{+0.22}_{−0.24} 0.67^{+0.46}_{−0.29} N N 1.2 37.8 161 ≤5.0 - - - - - - - - - - - 0.0 ≤37.0 162 35.3±8.0 13.7±5.2 19.9±5.9 33.6±7.4 1.8±3.8 26.1±6.6 4.4±4.3 -0.80^{+0.10}_{−0.14} -0.08^{+0.18}_{−0.15} 0.92^{+0.68}_{−0.46} N N 0.9 37.8 163 97.5±7.7 12.4±5.0 62.1±9.0 74.5±9.9 23.0±6.2 61.4±9.1 34.7±7.2 -0.34^{+0.08}_{−0.11} -0.60^{+0.14}_{−0.16} 0.45^{+0.13}_{−0.10} N N 2.3 38.2 164 ≤10.6 - - - - - - - - - - - 0.7 ≤37.3 165 11.2±3.6 3.6±3.4 8.3±4.3 11.9±5.0 -0.3±2.7 11.5±4.8 -0.5±2.7 -0.96^{+0.06}_{−0.04} -0.24^{+0.32}_{−0.35} 0.92^{+0.84}_{−0.54} N N 0.8 37.3 166 21.6±6.9 10.9±4.8 5.3±4.1 16.2±5.9 5.4±4.3 10.6±5.1 7.9±4.7 -0.23^{+0.30}_{−0.31} 0.38^{+0.34}_{−0.30} 0.03^{+0.45}_{−0.43} N P 0.6 37.6 167 ≤10.1 - - - - - - - - - - - 0.3 ≤37.3 168 15.5±5.3 2.4±2.9 10.1±4.4 12.5±4.8 3.0±3.2 11.8±4.7 3.8±3.4 -0.57^{+0.20}_{−0.24} -0.46^{+0.30}_{−0.40} 0.51^{+0.38}_{−0.30} - - 1.3 37.5 169 49.3±8.7 20.2±5.8 27.3±6.5 47.5±8.3 1.8±3.6 41.8±7.8 5.3±4.3 -0.83^{+0.11}_{−0.11} -0.04^{+0.14}_{−0.12} 0.98^{+0.75}_{−0.35} N N 1.1 37.9 170 25.4±6.9 8.0±4.3 14.3±5.2 22.3±6.3 3.1±3.8 20.6±6.0 3.6±4.0 -0.80^{+0.10}_{−0.12} -0.16^{+0.21}_{−0.22} 0.59^{+0.54}_{−0.35} N P 0.8 37.7 171 16.3±6.0 5.2±3.8 10.0±4.6 15.3±5.4 1.0±3.4 12.4±5.0 1.7±3.6 -0.85^{+0.13}_{−0.15} -0.16^{+0.24}_{−0.30} 0.70^{+0.78}_{−0.46} - - 0.2 37.5 172 10.7±6.3 5.6±4.0 3.6±3.8 9.2±5.0 1.3±3.6 8.6±4.7 0.5±3.6 -0.86^{+0.16}_{−0.14} 0.24^{+0.51}_{−0.43} 0.24^{+0.91}_{−0.67} - - 1.2 37.3 173 ≤1.5 - - - - - - - - - - - 6.8 ≤36.4 174 ≤1.6 - - - - - - - - - - - 1.2 ≤36.5 175 8.0±3.2 1.7±2.9 3.1±3.4 4.7±4.0 2.7±3.4 4.6±3.8 3.4±3.6 -0.25^{+0.41}_{−0.47} -0.11^{+0.62}_{−0.72} 0.05^{+0.65}_{−0.59} - - 0.8 37.2 176 ≤1.4 - - - - - - - - - - - 1.3 ≤36.4 177 ≤2.6 - - - - - - - - - - - 0.0 ≤36.7 178 ≤3.9 - - - - - - - - - - - 2.2 ≤36.8 179 9.4±3.3 -0.5±2.3 7.2±4.1 6.7±4.3 1.6±3.2 3.6±3.6 5.3±4.0 0.16^{+0.44}_{−0.45} -0.84^{+0.53}_{−0.92} 0.54^{+0.69}_{−0.46} - - 2.0 37.2 180 ≤10.2 - - - - - - - - - - - 0.5 ≤37.3 181 19.6±6.4 4.5±3.8 9.5±4.6 14.0±5.4 5.6±4.1 10.5±4.8 6.0±4.3 -0.36^{+0.29}_{−0.30} -0.21^{+0.29}_{−0.35} 0.24^{+0.32}_{−0.29} - - 0.8 37.6 182 4.4±2.8 2.5±3.2 2.8±3.2 5.3±4.0 -0.3±2.7 3.1±3.4 1.6±3.2 -0.42^{+0.30}_{−0.58} 0.05^{+0.57}_{−0.59} 0.46^{+1.07}_{−0.61} - - 1.3 36.9 183 16.1±6.0 2.0±3.2 6.1±4.0 8.0±4.6 8.0±4.6 7.4±4.3 8.5±4.7 -0.01^{+0.32}_{−0.31} -0.29^{+0.45}_{−0.62} -0.08^{+0.29}_{−0.30} - - 0.4 37.5 184 295.1±18.5 37.0±7.3 188.2±14.8 225.3±16.2 69.8±9.6 197.7±15.2 94.2±11.0 -0.42^{+0.05}_{−0.05} -0.60^{+0.06}_{−0.10} 0.46^{+0.07}_{−0.06} N N 2.1 38.7 185 65.3±6.5 11.6±4.7 39.7±7.5 51.3±8.4 14.5±5.2 45.9±8.0 18.3±5.7 -0.49^{+0.10}_{−0.12} -0.44^{+0.15}_{−0.15} 0.46^{+0.14}_{−0.14} N N 2.7 38.1 186 ≤4.5 - - - - - - - - - - - 1.9 ≤36.9 187 39.1±8.2 9.4±4.6 21.6±6.1 31.1±7.1 8.1±4.7 27.8±6.7 11.3±5.2 -0.49^{+0.17}_{−0.16} -0.27^{+0.19}_{−0.19} 0.43^{+0.24}_{−0.22} N N 0.0 37.9 188 ≤7.2 - - - - - - - - - - - 1.2 ≤37.1 189 14.0±3.7 1.4±2.9 10.6±4.6 12.1±5.0 2.7±3.4 10.9±4.7 3.4±3.6 -0.63^{+0.21}_{−0.25} -0.62^{+0.41}_{−0.67} 0.54^{+0.51}_{−0.35} N P 1.2 37.4 190 32.3±7.5 10.3±4.6 18.6±5.7 28.8±6.8 3.5±4.0 22.3±6.1 6.8±4.6 -0.61^{+0.19}_{−0.19} -0.16^{+0.16}_{−0.19} 0.67^{+0.51}_{−0.32} N N 1.1 37.8 191 20.9±6.7 7.0±4.3 9.2±4.6 16.2±5.8 4.7±4.1 11.5±5.1 6.3±4.4 -0.38^{+0.29}_{−0.30} -0.03^{+0.27}_{−0.26} 0.29^{+0.41}_{−0.34} N N 0.4 37.6 192 17.9±6.2 0.1±2.7 9.1±4.6 9.2±4.8 8.7±4.6 8.5±4.6 10.2±4.8 0.02^{+0.28}_{−0.28} -0.76^{+0.45}_{−0.92} 0.05^{+0.24}_{−0.24} - - 0.7 37.5 193 5.5±5.0 1.7±3.2 2.5±3.4 4.1±4.1 1.4±3.6 2.4±3.6 3.0±4.0 0.02^{+0.47}_{−0.45} -0.03^{+0.78}_{−0.83} 0.11^{+0.94}_{−0.75} - - 0.6 37.0 194 70.5±6.7 14.4±5.1 37.8±7.3 52.2±8.5 17.6±5.6 44.1±7.8 23.3±6.2 -0.37^{+0.11}_{−0.12} -0.30^{+0.13}_{−0.15} 0.36^{+0.13}_{−0.13} N Y 1.7 38.1 195 27.5±7.0 6.7±4.0 19.9±5.8 26.6±6.5 0.8±3.4 23.7±6.2 2.4±3.8 -0.89^{+0.08}_{−0.11} -0.38^{+0.22}_{−0.18} 0.99^{+0.83}_{−0.40} N N 0.0 37.7 196 ≤4.9 - - - - - - - - - - - 2.0 ≤37.0 197 21.2±6.6 4.4±3.8 12.3±5.0 16.7±5.8 4.5±4.0 12.1±5.1 7.7±4.6 -0.30^{+0.26}_{−0.27} -0.32^{+0.29}_{−0.35} 0.43^{+0.37}_{−0.32} N P 1.9 37.6 198 ≤3.1 - - - - - - - - - - - 0.0 ≤36.8 199 16.2±6.1 6.7±4.1 6.5±4.1 13.2±5.3 3.0±3.8 10.5±4.8 5.6±4.3 -0.41^{+0.31}_{−0.29} 0.11^{+0.29}_{−0.30} 0.29^{+0.60}_{−0.42} - - 2.1 37.5

TABLE 9 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

200 ≤1.4 - - - - - - - - - - - 1.8 ≤36.4 201 15.4±6.0 1.7±3.2 3.8±3.6 5.5±4.3 10.0±4.8 1.7±3.4 11.5±5.1 0.78^{+0.22}_{−0.17} -0.16^{+0.59}_{−0.78} -0.35^{+0.35}_{−0.40} - - 2.4 37.5 202 29.1±7.1 5.3±3.8 17.8±5.4 23.1±6.2 6.0±4.3 21.3±5.9 6.7±4.4 -0.59^{+0.18}_{−0.19} -0.40^{+0.21}_{−0.27} 0.46^{+0.32}_{−0.22} N N 1.3 37.7 203 22.6±6.6 5.3±3.8 11.8±4.8 17.1±5.7 5.5±4.1 14.6±5.2 5.8±4.3 -0.52^{+0.24}_{−0.24} -0.24^{+0.24}_{−0.27} 0.32^{+0.32}_{−0.27} N N 0.8 37.6 204 ≤2.4 - - - - - - - - - - - 0.0 ≤36.6 205 14.3±5.9 2.2±3.2 10.4±4.7 12.5±5.2 1.8±3.6 10.9±4.8 3.2±4.0 -0.68^{+0.16}_{−0.18} -0.48^{+0.37}_{−0.57} 0.59^{+0.72}_{−0.40} - - 1.1 37.4 206 ≤11.9 - - - - - - - - - - - 0.2 ≤37.4 207 ≤3.9 - - - - - - - - - - - 0.0 ≤36.8 208 11.2±5.5 -0.6±2.3 10.2±4.6 9.7±4.7 1.5±3.6 8.6±4.4 3.1±4.0 -0.63^{+0.19}_{−0.19} -0.99^{+0.46}_{−1.00} 0.62^{+0.77}_{−0.41} - - 0.2 37.3 209 60.7±9.3 3.1±3.4 32.3±6.9 35.3±7.3 25.4±6.5 27.9±6.5 33.0±7.1 0.01^{+0.13}_{−0.13} -0.81^{+0.26}_{−0.48} 0.13^{+0.13}_{−0.12} N N 1.1 38.1 210 13.2±5.7 5.7±3.8 6.6±4.1 12.3±5.1 0.8±3.4 10.6±4.7 3.2±4.0 -0.67^{+0.16}_{−0.19} 0.03^{+0.29}_{−0.30} 0.54^{+0.85}_{−0.49} - - 0.7 37.4 211 ≤5.6 - - - - - - - - - - - 2.0 ≤37.0 212 ≤3.2 - - - - - - - - - - - 1.3 ≤36.8 213 12.0±3.4 2.3±2.9 2.8±3.2 5.1±3.8 7.0±4.1 5.8±3.8 6.6±4.1 -0.02^{+0.32}_{−0.33} 0.03^{+0.51}_{−0.54} -0.32^{+0.37}_{−0.43} N N 1.6 37.3 214 ≤5.6 - - - - - - - - - - - 0.3 ≤37.0 215 ≤1.6 - - - - - - - - - - - 2.4 ≤36.5 216 24.1±6.9 9.1±4.4 9.5±4.6 18.5±5.9 5.6±4.4 14.7±5.3 6.2±4.6 -0.52^{+0.26}_{−0.24} 0.08^{+0.21}_{−0.24} 0.24^{+0.38}_{−0.32} N N 0.9 37.6 217 7.3±3.0 1.1±2.7 4.9±3.6 6.0±4.0 1.8±3.2 5.8±3.8 2.5±3.4 -0.55^{+0.21}_{−0.29} -0.38^{+0.46}_{−0.69} 0.35^{+0.67}_{−0.46} - - 2.0 37.1 218 ≤10.9 - - - - - - - - - - - 0.4 ≤37.3 219 ≤3.4 - - - - - - - - - - - 1.5 ≤36.8 220 91.7±11.0 31.1±6.8 48.4±8.1 79.5±10.2 12.2±5.1 73.4±9.8 12.9±5.2 -0.74^{+0.07}_{−0.08} -0.12^{+0.14}_{−0.06} 0.61^{+0.16}_{−0.15} N N 3.3 38.3 221 5.8±3.8 -0.2±1.9 2.7±2.9 2.5±2.9 3.4±3.2 0.6±2.3 5.3±3.6 0.79^{+0.21}_{−0.18} -0.69^{+0.61}_{−0.99} -0.05^{+0.37}_{−0.41} - - 1.4 37.0 222 ≤1.0 - - - - - - - - - - - 0.0 ≤36.7 223 31.9±7.3 3.7±3.4 20.7±5.9 24.3±6.4 7.6±4.4 20.5±5.9 10.1±4.8 -0.41^{+0.17}_{−0.19} -0.59^{+0.24}_{−0.35} 0.46^{+0.21}_{−0.22} N N 2.3 37.8 224 ≤2.8 - - - - - - - - - - - 0.0 ≤36.8 225 45.8±8.4 9.6±4.6 28.6±6.6 38.2±7.6 7.6±4.4 30.7±6.9 13.2±5.2 -0.46^{+0.14}_{−0.14} -0.35^{+0.16}_{−0.19} 0.59^{+0.24}_{−0.19} N P 0.8 37.9 226 ≤2.9 - - - - - - - - - - - 3.0 ≤36.7 227 74.4±10.2 15.4±5.2 47.1±8.1 62.5±9.2 11.9±5.2 54.4±8.6 18.7±6.0 -0.54^{+0.09}_{−0.12} -0.36^{+0.12}_{−0.15} 0.62^{+0.16}_{−0.17} N N 1.0 38.1 228 276.2±17.9 36.8±7.2 162.1±13.8 198.9±15.2 77.2±10.1 166.8±14.0 105.8±11.6 -0.29^{+0.05}_{−0.07} -0.53^{+0.06}_{−0.10} 0.35^{+0.07}_{−0.05} N N 12.8 38.7 229 37.5±7.8 6.9±4.0 22.8±6.1 29.7±6.8 7.8±4.6 26.5±6.5 10.4±5.0 -0.50^{+0.16}_{−0.16} -0.40^{+0.19}_{−0.22} 0.48^{+0.22}_{−0.21} N N 0.6 37.8 230 22.5±6.5 5.9±4.0 12.6±4.8 18.6±5.8 3.9±3.8 14.1±5.1 6.6±4.3 -0.45^{+0.23}_{−0.23} -0.21^{+0.24}_{−0.25} 0.48^{+0.43}_{−0.29} N N 0.3 37.6 231 10.3±3.1 1.4±2.7 7.1±4.0 8.5±4.3 2.1±3.2 8.1±4.1 2.6±3.4 -0.64^{+0.16}_{−0.25} -0.48^{+0.40}_{−0.57} 0.46^{+0.59}_{−0.41} N N 2.3 37.3 232 9.7±5.1 8.4±4.3 2.1±3.2 10.5±4.8 -0.8±2.7 4.7±3.8 -0.3±2.9 -0.84^{+0.19}_{−0.16} 0.59^{+0.59}_{−0.40} 0.46^{+1.07}_{−0.84} - - 0.2 37.3 233 5.9±2.6 2.3±2.9 4.2±3.4 6.5±4.0 0.0±2.7 6.1±3.8 -0.4±2.7 -0.92^{+0.13}_{−0.08} -0.11^{+0.40}_{−0.45} 0.61^{+0.92}_{−0.53} - - 1.6 37.0 234 ≤14.0 - - - - - - - - - - - 1.2 ≤37.4 235 ≤1.6 - - - - - - - - - - - 0.0 ≤36.5 236 ≤2.9 - - - - - - - - - - - 2.3 ≤36.7

NOTE. — Col. (1): Master ID, cols. (2)−(8): net counts, in each of the 7 energy bands (see Table 2 for definitions of these bands), col. (9): hardness ratio, cols. (10) and (11) color values, errors are given as 1σ, cols. (12) and (13): short-term variability, where (BB) indicate Bayesian block analysis and (K-S) indicates the Kolmogorov-Smirnov test, in both columns symbols indicate - (N) non-variable in all observations, (V) variable in at least one observation, (P) possible variability in at least one observation, col. (14): the significance of the change in L_X between the previous observation and the current observation respectively (equation 2), col. (15): log L_X (0.3−8.0 keV). Upper limit values of net B and L_X are at the 68% confidence level.

TABLE 10 SOURCE COUNTS, HARDNESS RATIOS, COLOR-COLOR VALUES AND VARIABILITY: OBSERVATION 6

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

1 10.1±5.4 -1.0±2.3 7.3±4.1 6.4±4.3 3.7±4.0 5.9±4.0 4.2±4.1 -0.33^{+0.41}_{−0.37} -0.92^{+0.54}_{−0.91} 0.27^{+0.51}_{−0.38} - - 2.1 37.6 2 47.4±8.4 9.8±4.4 24.2±6.2 34.0±7.1 13.3±5.2 31.0±6.8 14.9±5.4 -0.46^{+0.13}_{−0.14} -0.16^{+0.15}_{−0.20} 0.31^{+0.16}_{−0.16} N N 1.1 38.3 3 ≤3.0 - - - - - - - - - - - 0.0 ≤37.1 4 20.7±6.3 3.8±3.4 13.5±5.0 17.3±5.6 3.4±3.8 13.2±5.0 4.9±4.1 -0.60^{+0.23}_{−0.23} -0.32^{+0.27}_{−0.32} 0.56^{+0.49}_{−0.32} N N 1.8 37.9 5 85.8±10.7 22.6±6.0 51.1±8.3 73.7±9.8 12.1±5.1 58.5±8.9 20.9±6.1 -0.54^{+0.09}_{−0.10} -0.20^{+0.10}_{−0.12} 0.66^{+0.14}_{−0.17} N N 1.1 38.5 6 ≤4.7 - - - - - - - - - - - 0.0 ≤37.3 7 6.8±4.6 2.1±2.9 2.6±3.2 4.7±3.8 2.1±3.4 1.6±2.9 3.7±3.8 0.34^{+0.39}_{−0.28} 0.03^{+0.59}_{−0.62} 0.08^{+0.75}_{−0.67} - - 1.4 37.4 8 21.7±6.2 7.4±4.0 8.9±4.3 16.3±5.3 5.5±4.0 11.8±4.7 9.2±4.6 -0.23^{+0.22}_{−0.24} 0.08^{+0.21}_{−0.21} 0.24^{+0.30}_{−0.27} N N 1.3 37.9 9 ≤7.8 - - - - - - - - - - - 1.1 ≤37.5 10 ≤4.2 - - - - - - - - - - - 0.0 ≤37.2 11 ≤11.0 - - - - - - - - - - - 0.0 ≤37.6 12 ≤1.3 - - - - - - - - - - - 0.0 ≤36.7 13 88.8±10.7 17.0±5.3 48.5±8.1 65.4±9.3 23.3±6.2 55.2±8.6 31.1±6.9 -0.39^{+0.09}_{−0.10} -0.26^{+0.11}_{−0.14} 0.35^{+0.13}_{−0.09} N N 0.5 38.6 14 26.4±6.6 6.9±4.0 15.3±5.1 22.2±6.0 4.2±3.6 18.9±5.6 6.0±4.0 -0.59^{+0.16}_{−0.18} -0.19^{+0.19}_{−0.21} 0.56^{+0.33}_{−0.27} N N 0.5 38.0 15 12.1±5.1 2.3±2.9 5.3±3.6 7.6±4.1 4.6±3.8 6.1±3.8 5.4±4.0 -0.16^{+0.35}_{−0.33} -0.21^{+0.37}_{−0.46} 0.08^{+0.38}_{−0.32} - - 0.8 37.7 16 ≤10.6 - - - - - - - - - - - 0.5 ≤37.6 17 24.6±6.4 -0.1±2.3 16.4±5.2 16.3±5.3 8.3±4.3 12.8±4.8 12.2±4.8 -0.15^{+0.20}_{−0.21} -1.07^{+0.46}_{−0.92} 0.35^{+0.19}_{−0.19} N N 1.1 38.0 18 ≤4.0 - - - - - - - - - - - 0.0 ≤37.2 19 ≤13.3 - - - - - - - - - - - 1.0 ≤37.7 20 ≤2.1 - - - - - - - - - - - 0.0 ≤36.9 21 ≤4.9 - - - - - - - - - - - 0.8 ≤37.3 22 ≤1.2 - - - - - - - - - - - 1.6 ≤36.6 23 ≤5.8 - - - - - - - - - - - 1.1 ≤37.3 24 ≤2.6 - - - - - - - - - - - 0.7 ≤37.0 25 ≤3.1 - - - - - - - - - - - 0.0 ≤37.1 26 15.7±5.6 0.1±2.3 13.0±4.8 13.1±5.0 2.6±3.4 11.8±4.7 3.3±3.6 -0.67^{+0.17}_{−0.23} -0.99^{+0.46}_{−0.84} 0.62^{+0.53}_{−0.33} - - 0.5 37.8 27 ≤0.9 - - - - - - - - - - - 3.3 ≤36.5 28 ≤0.9 - - - - - - - - - - - 1.8 ≤36.5 29 12.1±5.1 4.0±3.4 8.1±4.1 12.0±4.8 0.0±2.7 7.8±4.1 1.9±3.2 -0.72^{+0.16}_{−0.28} -0.19^{+0.27}_{−0.32} 0.84^{+0.92}_{−0.46} - - 0.1 37.6 30 ≤3.3 - - - - - - - - - - - 2.0 ≤37.1 31 64.8±9.4 11.9±4.7 36.7±7.2 48.6±8.2 16.2±5.3 37.3±7.3 25.9±6.4 -0.25^{+0.12}_{−0.13} -0.36^{+0.11}_{−0.19} 0.41^{+0.12}_{−0.15} N N 0.3 38.4 32 ≤2.0 - - - - - - - - - - - 0.0 ≤36.9 33 ≤2.4 - - - - - - - - - - - 0.0 ≤36.9 34 ≤2.6 - - - - - - - - - - - 0.5 ≤37.0 35 17.9±5.8 0.9±2.7 13.3±4.8 14.2±5.1 3.8±3.6 12.7±4.8 5.7±4.0 -0.45^{+0.23}_{−0.24} -0.84^{+0.46}_{−0.69} 0.51^{+0.38}_{−0.30} - - 0.4 37.8 36 ≤0.7 - - - - - - - - - - - 2.3 ≤36.4 37 ≤12.0 - - - - - - - - - - - 2.1 ≤37.6 38 ≤11.9 - - - - - - - - - - - 1.5 ≤37.6 39 16.4±3.5 4.4±3.4 6.3±3.8 10.6±4.6 4.8±3.6 11.0±4.6 4.7±3.6 -0.46^{+0.22}_{−0.26} -0.05^{+0.26}_{−0.30} 0.13^{+0.30}_{−0.26} N P 0.7 37.8 40 16.1±3.5 4.5±3.4 6.4±3.8 10.9±4.6 5.2±3.6 11.2±4.6 5.1±3.6 -0.44^{+0.22}_{−0.24} -0.05^{+0.26}_{−0.27} 0.11^{+0.29}_{−0.24} N P 0.6 37.8 41 88.9±10.7 18.9±5.6 50.5±8.3 69.4±9.5 19.6±5.8 61.2±9.0 25.1±6.4 -0.47^{+0.08}_{−0.11} -0.32^{+0.11}_{−0.13} 0.46^{+0.11}_{−0.13} N N 0.7 38.5 42 61.6±9.2 15.8±5.2 35.0±7.1 50.8±8.3 10.8±4.7 41.5±7.6 15.6±5.3 -0.50^{+0.11}_{−0.13} -0.21^{+0.09}_{−0.18} 0.52^{+0.16}_{−0.16} N P 1.0 38.4 43 12.7±5.1 5.1±3.6 7.0±4.0 12.1±4.8 0.5±2.7 10.8±4.6 0.4±2.7 -0.94^{+0.09}_{−0.06} -0.03^{+0.24}_{−0.29} 0.76^{+0.84}_{−0.45} - - 1.6 37.7 44 ≤3.4 - - - - - - - - - - - 0.0 ≤37.1 45 ≤3.5 - - - - - - - - - - - 1.1 ≤37.1 46 ≤5.5 - - - - - - - - - - - 1.1 ≤37.3 47 ≤1.6 - - - - - - - - - - - 0.0 ≤36.7 48 ≤4.7 - - - - - - - - - - - 1.0 ≤37.2 49 ≤2.6 - - - - - - - - - - - 1.5 ≤37.0 50 14.1±5.4 4.0±3.4 6.9±4.0 10.9±4.7 3.3±3.4 5.6±3.8 5.8±4.0 -0.06^{+0.35}_{−0.35} -0.13^{+0.29}_{−0.33} 0.32^{+0.43}_{−0.35} - - 1.5 37.7

TABLE 10 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

51 ≤5.2 - - - - - - - - - - - 0.9 ≤37.3 52 ≤3.2 - - - - - - - - - - - 1.3 ≤37.1 53 ≤6.1 - - - - - - - - - - - 0.7 ≤37.3 54 ≤5.6 - - - - - - - - - - - 0.7 ≤37.3 55 ≤3.7 - - - - - - - - - - - 0.8 ≤37.1 56 11.8±5.4 0.0±2.7 11.4±4.7 11.4±5.0 0.4±2.9 11.8±4.8 1.0±3.2 -0.89^{+0.11}_{−0.11} -0.92^{+0.54}_{−0.84} 0.92^{+0.84}_{−0.46} - - 0.5 37.6 57 ≤8.0 - - - - - - - - - - - 0.9 ≤37.5 58 ≤3.3 - - - - - - - - - - - 0.5 ≤37.1 59 10.0±5.3 1.4±3.2 8.4±4.4 9.8±5.0 0.2±2.7 7.1±4.4 1.6±3.2 -0.73^{+0.19}_{−0.27} -0.46^{+0.38}_{−0.76} 0.84^{+0.92}_{−0.46} - - 0.0 37.6 60 6.5±4.3 2.3±2.9 4.8±3.6 7.1±4.1 -0.6±2.3 5.9±3.8 0.0±2.7 -0.90^{+0.14}_{−0.10} -0.19^{+0.40}_{−0.45} 0.84^{+0.92}_{−0.61} - - 0.3 37.4 61 ≤2.5 - - - - - - - - - - - 0.0 ≤36.9 62 ≤3.7 - - - - - - - - - - - 0.3 ≤37.1 63 18.7±5.9 1.6±2.9 8.8±4.3 10.4±4.7 8.3±4.3 7.4±4.1 11.0±4.7 0.14^{+0.26}_{−0.26} -0.51^{+0.40}_{−0.62} 0.05^{+0.22}_{−0.24} - - 0.4 37.8 64 ≤2.9 - - - - - - - - - - - 0.5 ≤37.0 65 ≤14.4 - - - - - - - - - - - 0.1 ≤37.7 66 30.1±7.2 7.6±4.3 16.5±5.4 24.1±6.5 6.0±4.0 20.2±6.0 8.6±4.4 -0.46^{+0.17}_{−0.19} -0.24^{+0.21}_{−0.22} 0.46^{+0.24}_{−0.25} N N 1.6 38.0 67 13.3±5.2 -0.9±1.9 8.9±4.3 8.0±4.3 5.3±3.8 5.8±3.8 8.1±4.3 0.11^{+0.30}_{−0.30} -1.22^{+0.61}_{−0.92} 0.24^{+0.27}_{−0.27} - - 0.4 37.8 68 21.5±6.3 4.5±3.6 9.1±4.4 13.6±5.2 7.8±4.3 10.7±4.7 10.5±4.7 -0.08^{+0.24}_{−0.24} -0.19^{+0.27}_{−0.32} 0.08^{+0.27}_{−0.21} N N 0.1 37.9 69 10.3±4.9 1.1±2.7 5.0±3.6 6.1±4.0 4.2±3.6 5.9±3.8 4.8±3.8 -0.19^{+0.36}_{−0.35} -0.38^{+0.46}_{−0.69} 0.08^{+0.38}_{−0.35} - - 0.7 37.7 70 ≤2.4 - - - - - - - - - - - 0.0 ≤36.9 71 13.7±5.2 0.3±2.3 7.9±4.1 8.2±4.3 5.5±3.8 7.0±4.0 7.1±4.1 -0.08^{+0.29}_{−0.29} -0.76^{+0.45}_{−0.84} 0.19^{+0.27}_{−0.27} - - 0.3 37.7 72 31.5±7.0 7.1±4.0 9.8±4.4 16.9±5.4 14.5±5.1 13.6±5.0 16.2±5.3 0.01^{+0.18}_{−0.20} -0.03^{+0.21}_{−0.25} -0.14^{+0.19}_{−0.19} N N 0.2 38.1 73 9.4±3.3 -0.1±2.3 6.7±4.0 6.6±4.1 2.6±3.2 5.5±3.8 4.3±3.6 -0.20^{+0.36}_{−0.38} -0.76^{+0.53}_{−0.92} 0.38^{+0.48}_{−0.38} - - 0.3 37.5 74 4.8±2.5 1.3±2.7 2.1±2.9 3.4±3.4 2.0±2.9 3.9±3.4 1.8±2.9 -0.50^{+0.23}_{−0.33} -0.05^{+0.64}_{−0.75} 0.05^{+0.65}_{−0.64} - - 0.2 37.2 75 ≤2.4 - - - - - - - - - - - 0.0 ≤36.9 76 13.9±5.0 0.6±2.3 3.7±3.2 4.3±3.4 9.6±4.3 3.5±3.2 10.5±4.4 0.44^{+0.28}_{−0.23} -0.46^{+0.54}_{−0.69} -0.35^{+0.24}_{−0.29} N N 2.2 37.7 77 ≤7.6 - - - - - - - - - - - 1.1 ≤37.4 78 23.4±6.5 6.7±4.0 14.3±5.1 21.0±6.0 2.4±3.4 17.9±5.6 4.0±3.8 -0.71^{+0.16}_{−0.19} -0.21^{+0.18}_{−0.25} 0.67^{+0.56}_{−0.35} Y N 1.0 37.9 79 16.6±5.3 7.6±4.0 8.6±4.1 16.2±5.2 0.5±2.3 14.4±5.0 1.5±2.7 -0.87^{+0.08}_{−0.13} 0.03^{+0.21}_{−0.22} 0.92^{+0.76}_{−0.46} N N 2.4 37.8 80 2.1±2.2 -0.2±2.3 2.9±3.2 2.7±3.4 -0.1±2.3 2.4±3.2 0.7±2.7 -0.55^{+0.30}_{−0.45} -0.46^{+0.61}_{−0.99} 0.61^{+0.92}_{−0.69} - - 0.7 36.9 81 ≤16.9 - - - - - - - - - - - 0.8 ≤37.8 82 ≤0.9 - - - - - - - - - - - 1.9 ≤36.5 83 ≤5.1 - - - - - - - - - - - 0.5 ≤37.3 84 23.0±4.5 5.0±3.8 14.2±5.1 19.2±5.9 4.1±3.6 16.1±5.5 5.9±4.0 -0.53^{+0.20}_{−0.21} -0.32^{+0.24}_{−0.30} 0.51^{+0.35}_{−0.27} N N 1.4 37.9 85 ≤20.5 - - - - - - - - - - - 0.2 ≤37.9 86 ≤8.4 - - - - - - - - - - - 0.3 ≤37.5 87 ≤9.0 - - - - - - - - - - - 0.0 ≤37.5 88 ≤8.6 - - - - - - - - - - - 0.9 ≤37.5 89 ≤4.1 - - - - - - - - - - - 0.7 ≤37.2 90 ≤5.4 - - - - - - - - - - - 0.0 ≤37.3 91 ≤5.1 - - - - - - - - - - - 0.0 ≤37.3 92 10.0±4.4 0.6±2.3 5.7±3.6 6.3±3.8 3.6±3.2 5.5±3.6 4.6±3.4 -0.16^{+0.29}_{−0.32} -0.61^{+0.46}_{−0.77} 0.21^{+0.30}_{−0.29} - - 1.2 37.5 93 ≤9.1 - - - - - - - - - - - 1.0 ≤37.5 94 ≤9.0 - - - - - - - - - - - 1.5 ≤37.5 95 ≤3.6 - - - - - - - - - - - 0.8 ≤37.1 96 93.3±11.1 28.0±6.5 50.1±8.3 78.1±10.1 15.2±5.3 62.2±9.1 23.0±6.2 -0.51^{+0.08}_{−0.10} -0.14^{+0.08}_{−0.13} 0.55^{+0.13}_{−0.15} N P 1.0 38.5 97 ≤3.9 - - - - - - - - - - - 2.0 ≤37.1 98 19.6±4.3 4.3±3.8 12.7±5.0 17.0±5.8 3.1±3.4 13.1±5.2 6.0±4.0 -0.44^{+0.22}_{−0.25} -0.35^{+0.30}_{−0.37} 0.56^{+0.46}_{−0.32} N N 0.9 37.8 99 39.2±9.1 8.5±5.4 25.0±6.8 33.5±8.2 5.7±4.5 29.0±7.7 9.8±5.1 -0.56^{+0.18}_{−0.17} -0.35^{+0.24}_{−0.34} 0.62^{+0.37}_{−0.28} N N 1.2 38.1 100 6.8±3.0 3.6±3.4 3.2±3.2 6.8±4.1 0.5±2.7 5.6±3.8 2.3±3.2 -0.55^{+0.21}_{−0.30} 0.13^{+0.46}_{−0.45} 0.46^{+0.84}_{−0.61} - - 0.1 37.4 101 ≤23.4 - - - - - - - - - - - 0.1 ≤37.9

TABLE 10 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

102 ≤1.7 - - - - - - - - - - - 0.0 ≤36.8 103 19.8±6.1 4.2±3.6 9.3±4.4 13.5±5.2 6.2±4.0 11.5±4.8 8.0±4.3 -0.25^{+0.23}_{−0.25} -0.21^{+0.26}_{−0.35} 0.19^{+0.27}_{−0.24} - - 0.8 37.8 104 ≤22.5 - - - - - - - - - - - 0.0 ≤37.9 105 ≤2.6 - - - - - - - - - - - 1.4 ≤37.0 106 ≤29.0 - - - - - - - - - - - 0.8 ≤38.0 107 ≤3.6 - - - - - - - - - - - 1.2 ≤37.1 108 9.6±5.0 2.6±3.2 7.3±4.1 9.9±4.7 -0.4±2.7 8.9±4.4 1.4±3.2 -0.82^{+0.15}_{−0.18} -0.29^{+0.37}_{−0.49} 0.84^{+0.99}_{−0.46} - - 0.1 37.5 109 ≤15.2 - - - - - - - - - - - 0.9 ≤37.7 110 11.2±6.0 1.3±3.2 8.9±4.6 10.2±5.1 1.0±3.7 8.2±4.8 1.8±3.9 -0.74^{+0.21}_{−0.26} -0.53^{+0.45}_{−0.77} 0.59^{+0.83}_{−0.46} - - 0.6 37.6 111 10.9±5.6 8.3±4.4 4.4±4.0 12.7±5.5 -1.8±2.3 9.3±4.9 0.5±3.2 -0.89^{+0.13}_{−0.11} 0.32^{+0.43}_{−0.35} 0.84^{+1.07}_{−0.69} - - 0.2 37.6 112 ≤1.6 - - - - - - - - - - - 0.6 ≤36.8 113 ≤1.8 - - - - - - - - - - - 0.0 ≤36.8 114 ≤33.9 - - - - - - - - - - - 1.2 ≤38.1 115 ≤5.1 - - - - - - - - - - - 0.6 ≤37.3 116 ≤23.5 - - - - - - - - - - - 2.9 ≤37.9 117 3211.3±58.0 1245.6±36.5 1644.8±41.8 2890.4±55.1 320.9±19.1 2525.5±51.5474.0±23.0 -0.72^{+0.01}_{−0.01} -0.03^{+0.01}_{−0.02} 0.74^{+0.03}_{−0.03} N N 6.3 40.1 118 32.7±7.9 7.8±4.5 20.0±6.2 27.8±7.2 4.9±3.8 19.9±6.3 9.8±4.8 -0.40^{+0.18}_{−0.21} -0.29^{+0.21}_{−0.25} 0.59^{+0.32}_{−0.24} N N 0.7 38.1 119 139.5±14.1 31.5±7.7 80.7±10.7 112.2±12.8 27.3±6.6 91.9±11.8 44.1±8.0 -0.41^{+0.08}_{−0.09} -0.32^{+0.10}_{−0.11} 0.50^{+0.11}_{−0.09} N N 0.6 38.7 120 50.2±6.9 18.4±6.6 26.8±7.2 45.1±9.3 6.0±4.1 38.5±8.7 9.5±4.7 -0.65^{+0.12}_{−0.13} -0.09^{+0.19}_{−0.15} 0.70^{+0.24}_{−0.29} N N 0.2 38.3 121 7.2±4.6 1.8±2.9 2.8±3.2 4.6±3.8 2.6±3.4 4.8±3.6 2.2±3.4 -0.52^{+0.24}_{−0.25} -0.05^{+0.59}_{−0.67} 0.03^{+0.67}_{−0.57} - - 0.8 37.4 122 7.8±4.7 3.1±3.2 3.7±3.4 6.8±4.1 1.1±3.2 6.5±4.0 1.8±3.4 -0.69^{+0.20}_{−0.31} 0.03^{+0.43}_{−0.46} 0.32^{+0.86}_{−0.56} - - 1.6 37.4 123 ≤58.3 - - - - - - - - - - - 1.6 ≤38.3 124 ≤19.4 - - - - - - - - - - - 1.0 ≤37.8 125 7.1±4.9 0.2±2.7 6.2±4.0 6.4±4.3 0.7±3.2 4.2±3.8 3.5±3.8 -0.21^{+0.43}_{−0.49} -0.61^{+0.53}_{−0.84} 0.56^{+0.83}_{−0.51} - - 0.0 37.4 126 ≤4.9 - - - - - - - - - - - 0.5 ≤37.2 127 ≤9.8 - - - - - - - - - - - 0.3 ≤37.5 128 ≤15.3 - - - - - - - - - - - 0.1 ≤37.7 129 25.8±4.9 10.3±4.8 10.1±5.1 20.4±6.6 4.3±3.6 18.7±6.3 5.5±4.0 -0.61^{+0.18}_{−0.21} 0.11^{+0.24}_{−0.24} 0.38^{+0.34}_{−0.33} N N 2.7 38.0 130 ≤9.2 - - - - - - - - - - - 0.1 ≤37.5 131 ≤2.2 - - - - - - - - - - - 0.0 ≤36.9 132 34.9±8.1 12.4±5.3 15.0±5.7 27.4±7.3 7.5±4.3 22.5±6.8 10.0±4.7 -0.44^{+0.16}_{−0.20} -0.02^{+0.23}_{−0.18} 0.32^{+0.24}_{−0.24} N Y 0.2 38.1 133 34.5±7.3 9.5±4.4 17.7±5.4 27.2±6.5 7.3±4.1 26.3±6.4 8.0±4.3 -0.58^{+0.14}_{−0.16} -0.16^{+0.16}_{−0.19} 0.40^{+0.22}_{−0.19} N N 0.8 38.1 134 ≤12.3 - - - - - - - - - - - 0.3 ≤37.6 135 ≤24.9 - - - - - - - - - - - 1.0 ≤37.9 136 ≤3.1 - - - - - - - - - - - 0.0 ≤37.0 137 ≤10.3 - - - - - - - - - - - 0.0 ≤37.6 138 ≤10.6 - - - - - - - - - - - 0.2 ≤37.6 139 ≤6.0 - - - - - - - - - - - 0.9 ≤37.3 140 31.1±7.5 9.2±4.6 12.8±5.1 22.0±6.4 9.1±4.6 22.2±6.3 9.5±4.7 -0.46^{+0.16}_{−0.19} -0.05^{+0.21}_{−0.22} 0.16^{+0.24}_{−0.19} N N 2.1 38.0 141 12.4±5.4 2.2±3.2 11.7±4.7 13.8±5.2 -1.4±2.3 11.9±4.8 1.4±3.2 -0.87^{+0.12}_{−0.13} -0.54^{+0.38}_{−0.53} 1.22^{+1.00}_{−0.46} - - 0.5 37.7 142 11.0±4.9 0.5±2.3 6.9±4.0 7.4±4.1 3.5±3.4 6.9±4.0 3.3±3.4 -0.47^{+0.30}_{−0.33} -0.69^{+0.46}_{−0.76} 0.29^{+0.38}_{−0.32} - - 1.2 37.6 143 ≤5.2 - - - - - - - - - - - 1.6 ≤37.3 144 ≤2.7 - - - - - - - - - - - 1.0 ≤37.0 145 ≤2.5 - - - - - - - - - - - 0.0 ≤36.9 146 155.3±13.9 24.3±6.4 95.0±10.9 119.3±12.3 36.0±7.2 103.2±11.5 50.7±8.3 -0.40^{+0.07}_{−0.08} -0.48^{+0.09}_{−0.12} 0.45^{+0.10}_{−0.07} N N 0.1 38.7 147 25.0±6.5 4.4±3.6 14.4±5.1 18.8±5.8 6.2±3.8 16.1±5.4 9.0±4.3 -0.34^{+0.18}_{−0.20} -0.38^{+0.25}_{−0.32} 0.38^{+0.21}_{−0.22} N N 0.2 37.9 148 29.7±7.3 4.7±3.8 18.4±5.7 23.0±6.4 6.6±4.3 22.2±6.2 8.2±4.6 -0.52^{+0.17}_{−0.19} -0.46^{+0.25}_{−0.34} 0.46^{+0.24}_{−0.25} N N 0.8 38.0 149 ≤18.7 - - - - - - - - - - - 2.4 ≤37.8 150 ≤7.1 - - - - - - - - - - - 0.4 ≤37.4 151 ≤3.3 - - - - - - - - - - - 0.7 ≤37.1 152 ≤1.9 - - - - - - - - - - - 3.2 ≤36.8 153 ≤2.9 - - - - - - - - - - - 0.0 ≤37.0

TABLE 10 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

154 25.3±6.4 5.0±3.6 13.8±5.0 18.8±5.7 6.5±3.8 18.1±5.6 7.5±4.0 -0.47^{+0.16}_{−0.18} -0.32^{+0.21}_{−0.27} 0.35^{+0.19}_{−0.22} - - 0.3 38.0 155 12.4±5.4 2.3±3.2 7.4±4.1 9.7±4.7 2.8±3.4 10.6±4.7 2.6±3.4 -0.72^{+0.14}_{−0.17} -0.32^{+0.37}_{−0.57} 0.38^{+0.51}_{−0.38} - - 0.3 37.6 156 ≤1.4 - - - - - - - - - - - 0.0 ≤36.7 157 32.3±7.4 9.0±4.4 20.5±5.9 29.6±6.9 2.7±3.6 24.7±6.4 5.4±4.1 -0.71^{+0.16}_{−0.17} -0.27^{+0.19}_{−0.19} 0.78^{+0.56}_{−0.32} N N 1.7 38.1 158 84.0±7.1 20.7±5.8 44.8±7.8 65.6±9.3 17.7±5.4 54.2±8.5 24.5±6.2 -0.43^{+0.09}_{−0.11} -0.22^{+0.10}_{−0.13} 0.41^{+0.16}_{−0.09} N N 0.1 38.5 159 23.2±6.6 4.6±3.6 10.7±4.7 15.3±5.4 7.9±4.4 10.6±4.7 10.4±4.8 -0.08^{+0.24}_{−0.25} -0.24^{+0.24}_{−0.32} 0.16^{+0.24}_{−0.24} N N 3.3 37.9 160 19.7±6.2 0.9±2.9 9.5±4.4 10.4±4.8 9.3±4.6 11.4±4.8 9.1±4.6 -0.18^{+0.23}_{−0.26} -0.61^{+0.38}_{−0.84} 0.03^{+0.24}_{−0.19} - - 0.6 37.9 161 ≤5.9 - - - - - - - - - - - 1.1 ≤37.3 162 17.6±6.1 3.8±3.6 7.8±4.3 11.6±5.1 5.9±4.0 10.9±4.9 5.6±4.0 -0.40^{+0.26}_{−0.28} -0.19^{+0.35}_{−0.40} 0.13^{+0.33}_{−0.26} - - 0.1 37.8 163 39.3±5.2 5.9±3.8 23.5±6.1 29.4±6.7 9.8±4.4 25.0±6.3 12.6±4.8 -0.39^{+0.14}_{−0.16} -0.48^{+0.19}_{−0.24} 0.40^{+0.16}_{−0.16} N N 0.9 38.2 164 6.1±4.5 0.7±2.7 2.6±3.2 3.3±3.6 2.8±3.4 3.0±3.4 2.5±3.4 -0.21^{+0.35}_{−0.53} -0.23^{+0.69}_{−0.92} 0.00^{+0.64}_{−0.62} - - 0.6 37.3 165 ≤8.1 - - - - - - - - - - - 0.2 ≤37.5 166 11.2±5.4 1.2±2.9 9.2±4.4 10.4±4.8 0.8±3.2 9.4±4.6 0.3±3.2 -0.90^{+0.12}_{−0.10} -0.53^{+0.38}_{−0.77} 0.70^{+0.83}_{−0.43} - - 0.0 37.6 167 ≤6.7 - - - - - - - - - - - 0.2 ≤37.4 168 ≤6.7 - - - - - - - - - - - 1.1 ≤37.4 169 ≤10.8 - - - - - - - - - - - 3.1 ≤37.6 170 8.9±5.0 5.5±3.8 4.3±3.6 9.8±4.7 -0.9±2.7 6.8±4.1 0.0±2.9 -0.89^{+0.15}_{−0.11} 0.19^{+0.35}_{−0.35} 0.69^{+0.99}_{−0.54} - - 0.7 37.5 171 ≤7.8 - - - - - - - - - - - 0.9 ≤37.4 172 ≤2.4 - - - - - - - - - - - 1.4 ≤36.9 173 6.7±4.8 7.3±4.1 -0.1±2.7 7.2±4.4 -0.5±2.7 4.4±3.8 -1.0±2.7 -0.88^{+0.18}_{−0.12} 0.92^{+0.84}_{−0.54} 0.08^{+1.07}_{−1.07} - - 1.4 37.4 174 ≤3.3 - - - - - - - - - - - 0.0 ≤37.1 175 ≤1.1 - - - - - - - - - - - 2.1 ≤36.6 176 ≤3.3 - - - - - - - - - - - 0.0 ≤37.1 177 ≤2.0 - - - - - - - - - - - 0.0 ≤36.9 178 ≤0.9 - - - - - - - - - - - 0.0 ≤36.5 179 13.9±5.5 3.0±3.2 9.6±4.4 12.5±5.0 1.4±3.2 9.2±4.4 5.2±4.0 -0.37^{+0.29}_{−0.29} -0.35^{+0.30}_{−0.40} 0.64^{+0.75}_{−0.40} - - 1.6 37.7 180 ≤1.0 - - - - - - - - - - - 1.4 ≤36.6 181 6.5±4.5 1.6±2.9 1.6±2.9 3.2±3.6 3.3±3.4 4.0±3.6 3.2±3.4 -0.21^{+0.43}_{−0.49} 0.11^{+0.80}_{−0.81} -0.19^{+0.59}_{−0.75} - - 0.6 37.4 182 ≤9.1 - - - - - - - - - - - 1.2 ≤37.5 183 10.2±4.9 0.1±2.3 7.7±4.1 7.8±4.3 2.4±3.2 5.6±3.8 5.0±3.8 -0.14^{+0.35}_{−0.37} -0.84^{+0.53}_{−0.84} 0.46^{+0.51}_{−0.38} - - 0.3 37.6 184 149.5±13.5 23.4±6.1 81.0±10.2 104.4±11.4 45.1±8.0 89.3±10.6 55.9±8.7 -0.29^{+0.08}_{−0.08} -0.42^{+0.08}_{−0.13} 0.28^{+0.09}_{−0.08} N N 0.1 38.7 185 97.7±11.2 12.7±4.8 58.5±8.8 71.2±9.6 26.5±6.5 63.3±9.1 31.1±6.9 -0.40^{+0.08}_{−0.10} -0.55^{+0.12}_{−0.16} 0.35^{+0.13}_{−0.07} N N 5.6 38.6 186 ≤12.3 - - - - - - - - - - - 2.1 ≤37.6 187 20.3±6.1 5.8±3.8 9.8±4.4 15.6±5.3 4.7±3.8 11.3±4.7 6.5±4.1 -0.34^{+0.24}_{−0.26} -0.13^{+0.24}_{−0.25} 0.32^{+0.32}_{−0.29} N N 0.0 37.9 188 ≤2.3 - - - - - - - - - - - 0.9 ≤36.9 189 3.2±2.3 0.4±2.3 0.9±2.7 1.3±2.9 3.0±3.2 1.8±2.9 2.7±3.2 0.16^{+0.52}_{−0.46} -0.08^{+0.92}_{−0.99} -0.31^{+0.62}_{−0.76} - - 1.3 37.1 190 20.3±6.1 2.9±3.2 17.4±5.4 20.3±5.9 -0.1±2.7 14.8±5.2 3.8±3.6 -0.68^{+0.19}_{−0.20} -0.62^{+0.30}_{−0.37} 1.15^{+0.91}_{−0.39} N N 0.5 37.9 191 9.8±5.0 2.0±2.9 4.4±3.6 6.4±4.1 3.4±3.6 4.1±3.6 4.2±3.8 -0.08^{+0.46}_{−0.47} -0.19^{+0.46}_{−0.59} 0.11^{+0.51}_{−0.43} - - 0.2 37.5 192 ≤3.4 - - - - - - - - - - - 2.0 ≤37.1 193 ≤3.2 - - - - - - - - - - - 0.7 ≤37.1 194 41.8±5.3 10.4±4.4 23.3±6.0 33.7±7.0 8.8±4.3 28.1±6.5 12.6±4.8 -0.44^{+0.14}_{−0.15} -0.26^{+0.17}_{−0.15} 0.43^{+0.19}_{−0.16} N N 0.9 38.2 195 19.2±6.1 4.8±3.6 12.4±4.8 17.2±5.6 1.9±3.4 10.2±4.6 6.7±4.3 -0.30^{+0.28}_{−0.27} -0.29^{+0.24}_{−0.27} 0.67^{+0.67}_{−0.38} - - 0.7 37.8 196 ≤11.7 - - - - - - - - - - - 1.9 ≤37.6 197 7.0±4.6 -0.2±2.3 6.6±4.0 6.3±4.1 0.6±2.9 4.1±3.6 3.3±3.6 -0.22^{+0.44}_{−0.47} -0.76^{+0.45}_{−1.00} 0.61^{+0.84}_{−0.46} - - 0.7 37.4 198 ≤1.5 - - - - - - - - - - - 0.0 ≤36.7 199 ≤1.8 - - - - - - - - - - - 2.3 ≤36.8 200 ≤0.8 - - - - - - - - - - - 0.0 ≤36.5 201 ≤4.2 - - - - - - - - - - - 1.5 ≤37.2 202 13.0±5.4 -0.3±2.3 7.7±4.1 7.4±4.3 5.5±4.0 8.5±4.3 5.2±4.0 -0.33^{+0.31}_{−0.30} -0.84^{+0.46}_{−0.99} 0.16^{+0.32}_{−0.27} - - 0.2 37.7 203 11.0±5.0 0.7±2.7 10.0±4.4 10.7±4.7 0.4±2.7 9.6±4.4 0.2±2.7 -0.94^{+0.10}_{−0.06} -0.76^{+0.45}_{−0.77} 0.92^{+0.84}_{−0.46} - - 0.1 37.6 204 ≤0.7 - - - - - - - - - - - 0.0 ≤36.4

TABLE 10 — Continued

Masterid Net Counts HR C21 C32 Variability Log L_X B-band S1-band S2-band S-band H-band Sc-band Hc-band BB k-S signif. (0.3−8.0 keV) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15)

205 14.0±5.4 1.1±2.7 8.8±4.3 9.8±4.6 4.2±3.6 9.5±4.4 4.0±3.6 -0.50^{+0.27}_{−0.28} -0.61^{+0.38}_{−0.69} 0.32^{+0.35}_{−0.29} - - 1.1 37.7 206 4.2±4.2 0.6±2.7 4.8±3.6 5.4±4.0 -1.2±2.3 4.4±3.6 -0.5±2.7 -0.87^{+0.17}_{−0.13} -0.46^{+0.54}_{−0.84} 0.84^{+0.99}_{−0.53} - - 0.0 37.2 207 ≤3.2 - - - - - - - - - - - 0.0 ≤37.1 208 ≤2.6 - - - - - - - - - - - 1.5 ≤37.0 209 20.3±6.0 3.1±3.2 10.2±4.4 13.3±5.0 7.1±4.1 9.0±4.3 9.8±4.6 -0.03^{+0.25}_{−0.25} -0.38^{+0.30}_{−0.34} 0.19^{+0.24}_{−0.24} N N 1.4 37.9 210 ≤3.6 - - - - - - - - - - - 1.4 ≤37.1 211 ≤4.4 - - - - - - - - - - - 0.0 ≤37.2 212 ≤10.3 - - - - - - - - - - - 1.6 ≤37.6 213 6.1±2.9 0.1±2.3 2.3±2.9 2.4±3.2 4.1±3.4 2.2±2.9 4.0±3.4 0.27^{+0.45}_{−0.43} -0.38^{+0.69}_{−0.92} -0.19^{+0.43}_{−0.45} - - 0.1 37.4 214 ≤0.9 - - - - - - - - - - - 0.9 ≤36.5 215 ≤3.7 - - - - - - - - - - - 0.0 ≤37.1 216 11.3±5.1 1.9±2.9 9.9±4.4 11.8±4.8 -0.5±2.7 11.8±4.7 0.1±2.9 -0.94^{+0.08}_{−0.06} -0.51^{+0.38}_{−0.54} 0.99^{+0.92}_{−0.46} - - 0.2 37.6 217 3.6±2.2 -0.8±1.9 3.5±3.2 2.7±3.2 0.2±2.3 3.3±3.2 1.1±2.7 -0.60^{+0.24}_{−0.40} -0.84^{+0.69}_{−0.92} 0.61^{+0.92}_{−0.53} - - 0.0 37.1 218 ≤0.8 - - - - - - - - - - - 1.6 ≤36.5 219 ≤6.2 - - - - - - - - - - - 1.5 ≤37.3 220 38.6±7.5 8.7±4.1 22.1±5.9 30.8±6.7 7.8±4.1 24.1±6.1 11.7±4.7 -0.41^{+0.15}_{−0.15} -0.29^{+0.16}_{−0.19} 0.46^{+0.21}_{−0.17} N N 1.6 38.4 221 ≤5.7 - - - - - - - - - - - 0.1 ≤37.3 222 1.4±3.8 0.1±2.7 -0.2±2.3 -0.1±2.9 1.5±3.2 1.6±2.9 1.0±3.2 -0.23^{+0.23}_{−0.77} 0.23^{+1.07}_{−1.07} -0.31^{+0.84}_{−1.14} - - 0.3 36.7 223 12.8±5.1 0.9±2.7 6.2±3.8 7.1±4.1 5.7±3.8 6.6±4.0 6.5±4.0 -0.08^{+0.29}_{−0.32} -0.53^{+0.45}_{−0.77} 0.05^{+0.27}_{−0.26} - - 0.6 37.7 224 ≤4.4 - - - - - - - - - - - 0.0 ≤37.2 225 13.1±5.4 -0.3±2.3 12.3±4.8 12.0±5.0 1.1±2.9 12.1±4.8 1.5±3.2 -0.86^{+0.12}_{−0.14} -1.07^{+0.46}_{−0.92} 0.83^{+0.75}_{−0.43} - - 1.5 37.7 226 11.4±5.1 4.2±3.4 4.9±3.6 9.2±4.4 2.2±3.4 6.1±3.8 3.8±3.8 -0.38^{+0.38}_{−0.34} 0.03^{+0.32}_{−0.32} 0.29^{+0.65}_{−0.45} - - 2.1 37.6 227 19.4±3.8 4.5±3.4 12.5±4.7 17.0±5.3 3.9±3.4 15.2±5.1 4.9±3.6 -0.56^{+0.17}_{−0.21} -0.32^{+0.21}_{−0.27} 0.48^{+0.32}_{−0.24} Y N 2.9 37.8 228 61.3±6.2 11.5±4.6 37.3±7.2 48.9±8.1 13.9±5.0 39.1±7.4 19.8±5.7 -0.38^{+0.11}_{−0.13} -0.43^{+0.16}_{−0.14} 0.42^{+0.17}_{−0.11} N N 7.3 38.3 229 25.6±6.7 5.7±3.8 13.6±5.0 19.3±5.8 6.4±4.1 18.4±5.6 7.0±4.3 -0.51^{+0.19}_{−0.20} -0.27^{+0.24}_{−0.24} 0.32^{+0.27}_{−0.21} N N 0.8 38.0 230 10.1±5.0 1.8±2.9 7.6±4.1 9.4±4.6 0.7±2.9 10.3±4.6 0.2±2.9 -0.93^{+0.11}_{−0.07} -0.43^{+0.40}_{−0.56} 0.69^{+0.84}_{−0.46} - - 0.3 37.6 231 5.2±2.5 0.5±2.3 2.3±2.9 2.8±3.2 2.8±3.2 1.2±2.7 3.7±3.4 0.49^{+0.51}_{−0.27} -0.31^{+0.62}_{−0.91} -0.05^{+0.51}_{−0.51} - - 0.0 37.3 232 ≤4.7 - - - - - - - - - - - 1.0 ≤37.2 233 6.7±5.7 -0.1±2.3 5.6±3.8 5.5±4.0 0.8±2.9 7.4±4.1 0.4±2.9 -0.88^{+0.14}_{−0.12} -0.69^{+0.54}_{−0.91} 0.53^{+0.85}_{−0.45} - - 0.6 37.4 234 ≤9.9 - - - - - - - - - - - 0.3 ≤37.6 235 ≤3.9 - - - - - - - - - - - 0.0 ≤37.1 236 ≤9.6 - - - - - - - - - - - 1.7 ≤37.5

NOTE. — Col. (1): Master ID, cols. (2)−(8): net counts, in each of the 7 energy bands (see Table 2 for definitions of these bands), col. (9): hardness ratio, cols. (10) and (11) color values, errors are given as 1σ, cols. (12) and (13): short-term variability, where (BB) indicate Bayesian block analysis and (K-S) indicates the Kolmogorov-Smirnov test, in both columns symbols indicate - (N) non-variable in all observations, (V) variable in at least one observation, (P) possible variability in at least one observation, col. (14): the significance of the change in L_X between the previous observation and the current observation respectively (equation 2), col. (15): log L_X (0.3−8.0 keV). Upper limit values of net B and L_X are at the 68% confidence level.

TABLE 11 PROPERTIES OF OPTICAL SOURCES THAT ARE CORRELATED WITH AN X-RAY POINT

SOURCE

Masterid V I V−I GC separation Ratio (arcsec) (1) (2) (3) (4) (5) (6)

51 21.21±0.01 20.11±0.01 1.11±0.02 0.40 1.02 63 22.31±0.02 21.17±0.03 1.14±0.03 0.48 1.73 68 20.25±0.01 19.21±0.01 1.04±0.01 0.38 1.45 76 22.75±0.03 21.66±0.05 1.09±0.06 0.26 1.01 81 22.10±0.02 20.94±0.04 1.16±0.04 0.23 0.70 83 21.63±0.01 20.63±0.02 1.00±0.02 0.19 0.76 84 22.14±0.02 20.91±0.03 1.23±0.04 0.19 0.72 85 22.29±0.02 21.39±0.05 0.90±0.05 0.33 1.22 96 20.96±0.01 19.94±0.01 1.03±0.02 0.27 1.16 98 22.68±0.04 21.71±0.06 0.97±0.07 0.18 0.70 108 21.64±0.01 20.54±0.02 1.10±0.02 0.35 1.27 118 21.97±0.02 20.91±0.03 1.06±0.04 0.24 0.98 134 23.80±0.11 22.62±0.13 1.18±0.17 0.13 0.39 148 22.89±0.04 21.69±0.06 1.19±0.07 0.11 0.46 153 22.66±0.03 21.59±0.05 1.08±0.06 0.49 1.10 154 20.61±0.01 19.47±0.01 1.14±0.01 0.04 0.15 161 23.34±0.04 22.11±0.06 1.24±0.07 0.17 0.35 162 23.31±0.06 22.06±0.07 1.26±0.09 0.13 0.45 163 21.80±0.02 20.68±0.02 1.12±0.03 0.09 0.39 165 22.53±0.02 21.30±0.03 1.23±0.04 0.14 0.45 167 22.06±0.02 20.83±0.02 1.23±0.03 0.44 1.04 172 21.40±0.01 20.41±0.02 0.98±0.02 0.22 0.45 173 23.17±0.04 22.18±0.07 0.99±0.08 0.53 0.76 174 21.40±0.01 20.31±0.01 1.09±0.02 0.26 0.67 179 21.73±0.01 20.60±0.02 1.13±0.02 0.34 1.19 185 22.30±0.02 21.15±0.03 1.15±0.03 0.07 0.32 187 24.19±0.08 22.87±0.11 1.32±0.14 0.29 1.11 190 22.42±0.02 21.25±0.03 1.16±0.04 0.20 0.72 191 22.83±0.03 21.81±0.04 1.02±0.05 0.08 0.28 193 24.07±0.07 23.14±0.11 0.93±0.13 0.02 0.06 194 21.75±0.01 20.78±0.02 0.97±0.03 0.15 0.64 199 22.14±0.02 21.08±0.03 1.06±0.03 0.16 0.40 202 23.08±0.03 21.88±0.04 1.20±0.05 0.35 1.32 203 22.30±0.02 21.16±0.03 1.14±0.03 0.28 0.91 208 22.65±0.02 21.71±0.04 0.94±0.04 0.27 0.85 214 21.34±0.01 20.28±0.01 1.06±0.02 0.16 0.33 215 22.79±0.02 21.93±0.04 0.86±0.05 0.36 0.93 216 21.32±0.01 20.35±0.02 0.97±0.02 0.37 1.39 217 21.03±0.01 20.14±0.01 0.89±0.01 0.48 1.38 117 19.39±0.02 18.58±0.03 0.81±0.03 0.09 0.44 128 24.15±0.22 22.80±0.24 1.35±0.33 0.51 1.96 129 24.43±0.28 23.32±0.38 1.12±0.47 0.16 0.56 147 24.00±0.14 23.28±0.29 0.73±0.32 0.45 1.86 189 19.73±0.01 18.52±0.01 1.21±0.01 0.16 0.61 213 21.77±0.02 20.53±0.02 1.23±0.03 0.42 1.44

NOTE. — The sources in the top section of the table, denoted by the horizontal line, have been confirmed as globular clusters, while those in the bottom section of the table have all been identified as background objects.

TABLE 12 PROPERTIES OF OPTICAL SOURCES THAT HAVE BEEN CLASSIFIED AS ‘EXCLUDED

MATCHES’; SOURCES DETECTED BETWEEN 0.6′′ AND 3′′ OF AN X-RAY POINT SOURCE

Masterid V I V−I GC separation Ratio (arcsec) (1) (2) (3) (4) (5) (6)

75 23.21±0.04 22.09±0.06 1.12±0.07 0.66 1.13 88 23.35±0.06 22.22±0.10 1.13±0.12 0.66 1.99 93 22.76±0.03 21.70±0.04 1.07±0.05 1.61 2.49 99 22.11±0.03 20.78±0.03 1.33±0.04 0.98 3.91 104 22.56±0.04 21.52±0.07 1.04±0.08 2.26 8.64 105 22.97±0.07 21.76±0.08 1.21±0.10 2.23 5.57 106 22.16±0.17 21.09±0.23 1.07±0.29 2.27 8.92 113 23.96±0.08 22.73±0.11 1.24±0.14 1.68 3.42 119 23.90±0.17 22.90±0.26 1.00±0.31 2.25 9.99 120 22.31±0.04 21.61±0.09 0.70±0.10 1.66 7.15 124 23.66±0.10 22.67±0.15 0.98±0.18 2.31 8.96 125 24.18±0.14 23.49±0.26 0.69±0.29 2.46 8.41 127 21.78±0.03 20.81±0.03 0.97±0.04 2.22 7.07 135 23.93±0.12 22.63±0.16 1.29±0.20 1.69 6.09 136 23.64±0.07 22.32±0.08 1.31±0.11 1.34 2.23 137 20.75±0.01 19.66±0.02 1.09±0.02 1.50 5.19 139 23.79±0.11 23.01±0.24 0.78±0.26 2.70 10.53 149 23.46±0.08 22.22±0.11 1.24±0.14 1.33 3.73 151 21.28±0.01 20.30±0.01 0.97±0.02 0.77 1.77 152 24.38±0.16 23.42±0.27 0.95±0.31 1.90 4.37 157 22.07±0.02 21.09±0.03 0.98±0.04 1.99 8.19 158 23.73±0.11 22.96±0.19 0.77±0.22 2.76 12.18 166 24.57±0.16 23.64±0.27 0.92±0.31 2.52 8.55 168 21.70±0.01 20.57±0.02 1.14±0.02 1.72 4.74 170 23.62±0.05 22.71±0.08 0.91±0.10 1.64 6.10 171 23.56±0.05 22.59±0.07 0.97±0.09 2.59 8.24 176 22.45±0.02 21.24±0.03 1.20±0.03 0.99 2.06 177 21.02±0.01 19.88±0.01 1.14±0.01 1.95 2.02 180 22.81±0.03 21.53±0.04 1.28±0.05 2.11 4.58 184 23.82±0.06 22.98±0.10 0.84±0.12 1.97 8.84 198 20.85±0.01 19.92±0.01 0.93±0.01 0.67 1.24 78 23.71±0.05 21.87±0.05 1.84±0.07 1.60 6.18 82 20.99±0.01 19.95±0.02 1.04±0.02 1.80 3.44 100 26.52±0.92 25.16±1.61 1.36±1.86 0.87 2.84 132 23.21±0.11 21.85±0.12 1.35±0.16 1.63 6.72 145 24.41±0.14 23.23±0.18 1.18±0.23 1.97 5.07 197 25.11±0.18 23.20±0.12 1.91±0.21 1.55 4.56 218 24.12±0.07 21.42±0.03 2.70±0.08 0.80 1.78

NOTE. — The sources in the top section of the table, denoted by the horizontal line, have been confirmed as globular clusters, while those in the bottom section of the table have all been identified as background objects.

TABLE 13 RATIO VALUES OF POTENTIAL TRANSIENT CANDIDATES

Masterid Mode Ratio Lower Bound Ratio Variability

27 5.0 3.6 V 30 3.2 2.2 V 32 4.5 3.7 V 59 4.8 3.5 V 83 57.8 35.5 TC 91 9.0 8.3 PTC 92 5.8 4.3 V 113 3.5 2.4 V 139 26.1 18.9 TC 152 5.3 4.2 V 156 6.2 5.5 PTC 159 13.6 5.8 PTC 204 871.7 202.9 TC

NOTE. — The 13 sources that were identified as potential transients candidates. Mode ratios and lower bound ratios were derived from Bayesian modeling, see §2.4 for more details. Sources were determined to be transient candidates (TC) if the lower bound >10, possible transient candidates (PTC) if the lower bound >5 and variable (V), if lower than 5.

TABLE 14 SUMMARY OF LONG-TERM AND SHORT-TERM SOURCE VARIABILITY

Short-Term Long-Term Variability Total Variability N V TC PTC U

N 7 (7) 11 (9) 0 (0) 0 (0) 0 (0) 18 (16) V 3 (2) 6 (5) 0 (0) 0 (0) 0 (0) 9 (7) P 11 (7) 14 (10) 0 (0) 0 (0) 0 (0) 25 (17) U 76 (54) 66 (52) 3 (3) 3 (3) 36 (28) 184 (140) Total 97 (70) 97 (76) 3 (3) 3 (3) 36 (28) 236 (180)

NOTE. — The long-term variability definitions: N-non-variable, V-variable, TC-transient candidate, PTC-possible transient candidate and U unable to determine variability as all individual observations were upper limits. Short-term variability definitions: N-non-variable in all six observation, V-variable in a least one observation, P-possible variability in at least one observation (see §2.4 for full definition), U too few counts in all six observations to determine variability. Bold values in brackets indicate the number of sources within the D_{25} ellipse.

TABLE 15 RAW SOURCE AND BACKGROUND COUNTS FROM THE CO-ADDED OBSERVATION

Masterid Net B Counts Raw Counts B-band S1-band S2-band H-band Bc-band Sc-band Hc-band (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16)

1 139.8 198.0 58.2 13.0 15.3 61.0 13.0 124.0 29.8 191.0 48.5 54.0 14.9 137.0 33.6 2 386.2 458.0 71.3 74.0 16.5 254.0 16.6 130.0 38.2 438.0 61.9 278.0 19.4 160.0 42.5 3 7.8 69.0 61.9 15.0 15.8 25.0 15.5 29.0 30.6 61.0 53.1 29.0 18.7 32.0 34.3 4 266.1 333.0 66.6 94.0 15.2 162.0 16.7 77.0 34.8 312.0 58.1 215.0 19.3 97.0 38.9 5 725.7 787.0 61.3 217.0 14.8 413.0 14.7 157.0 31.8 737.0 53.6 527.0 18.4 210.0 35.3 6 17.5 75.0 58.1 9.0 15.7 23.0 13.9 43.0 28.6 72.0 49.4 22.0 17.3 50.0 32.1 7 - - - - - - - - - - - - - - - 8 128.6 180.0 51.4 44.0 11.1 89.0 12.4 47.0 28.0 169.0 45.0 108.0 14.2 61.0 30.9 9 46.7 108.0 61.3 31.0 14.6 39.0 15.4 38.0 31.3 97.0 52.7 52.0 17.1 45.0 35.6 10 7.7 44.0 36.3 13.0 8.1 15.0 9.9 16.0 18.4 39.0 32.4 21.0 11.6 18.0 20.7 11 67.4 99.0 31.6 14.0 8.1 41.0 7.7 44.0 15.8 95.0 27.4 41.0 10.0 54.0 17.3 12 - - - - - - - - - - - - - - - 13 1110.4 1164.0 53.6 296.0 14.0 618.0 14.2 250.0 25.4 1113.0 46.4 785.0 17.9 328.0 28.5 14 258.4 303.0 44.6 79.0 10.2 147.0 12.0 77.0 22.4 288.0 38.9 193.0 13.4 95.0 25.5 15 80.6 114.0 33.4 19.0 7.1 53.0 8.7 42.0 17.6 109.0 29.4 58.0 9.7 51.0 19.6 16 31.9 66.0 34.1 14.0 8.2 23.0 8.7 29.0 17.2 58.0 30.2 22.0 11.2 36.0 19.0 17 159.3 212.0 52.7 38.0 13.9 108.0 13.7 66.0 25.1 206.0 45.5 124.0 16.5 82.0 29.0 18 - - - - - - - - - - - - - - - 19 56.7 88.0 31.3 18.0 7.9 47.0 7.5 23.0 15.9 83.0 27.0 55.0 9.2 28.0 17.8 20 22.4 55.0 32.6 20.0 7.8 15.0 8.9 20.0 15.9 50.0 28.6 29.0 10.9 21.0 17.7 21 35.3 69.0 33.7 14.0 7.1 28.0 9.1 27.0 17.5 66.0 30.4 33.0 10.9 33.0 19.5 22 22.8 55.0 32.2 16.0 8.6 23.0 8.0 16.0 15.7 50.0 27.5 32.0 10.1 18.0 17.4 23 45.2 76.0 30.8 22.0 7.4 34.0 7.6 20.0 15.8 71.0 26.7 48.0 9.2 23.0 17.5 24 38.3 71.0 32.7 11.0 7.4 25.0 8.6 35.0 16.7 64.0 28.4 21.0 10.1 43.0 18.3 25 20.9 51.0 30.1 9.0 7.9 26.0 7.8 16.0 14.4 50.0 25.7 27.0 9.5 23.0 16.2 26 78.9 111.0 32.1 9.0 7.6 61.0 8.9 41.0 15.5 104.0 28.0 55.0 9.8 49.0 18.2 27 25.0 50.0 24.1 10.0 6.3 19.0 6.3 21.0 11.5 45.0 21.1 21.0 8.2 24.0 12.9 28 27.0 53.0 26.9 11.0 6.9 20.0 7.1 22.0 12.8 49.0 23.4 22.0 8.8 27.0 14.5 29 106.9 139.0 32.1 23.0 7.1 70.0 8.6 46.0 16.3 132.0 27.7 76.0 9.6 56.0 18.1 30 29.5 63.0 33.5 17.0 8.3 21.0 9.2 25.0 16.0 57.0 29.4 24.0 11.1 33.0 18.2 31 454.7 486.0 31.3 104.0 6.8 264.0 9.6 118.0 14.9 472.0 27.7 303.0 10.3 169.0 17.4 32 19.1 54.0 34.9 33.0 9.9 6.0 9.0 15.0 16.0 35.0 30.4 18.0 12.5 17.0 17.9 33 14.2 49.0 34.8 21.0 9.4 10.0 8.7 18.0 16.7 40.0 30.3 20.0 11.9 20.0 18.4 34 13.0 23.0 10.0 8.0 2.5 7.0 2.7 8.0 4.8 16.0 8.7 7.0 3.2 9.0 5.5 35 167.1 199.0 31.9 37.0 9.0 105.0 8.0 57.0 15.0 194.0 27.6 124.0 10.4 70.0 17.2 36 33.4 70.0 36.6 22.0 8.4 30.0 9.8 18.0 18.4 63.0 32.8 40.0 12.0 23.0 20.7 37 23.5 57.0 33.5 16.0 9.1 25.0 8.8 16.0 15.6 54.0 29.0 35.0 11.2 19.0 17.8 38 64.3 74.0 9.7 23.0 2.4 34.0 2.7 17.0 4.5 66.0 8.6 40.0 3.4 26.0 5.2 39 139.8 153.0 13.2 41.0 3.4 73.0 3.7 39.0 6.0 145.0 11.6 93.0 4.8 52.0 6.8 40 126.8 139.0 12.2 27.0 3.3 76.0 3.5 36.0 5.5 133.0 10.7 88.0 4.6 45.0 6.1 41 662.3 698.0 35.7 136.0 9.5 389.0 9.4 173.0 16.9 671.0 31.6 439.0 12.6 232.0 19.0 42 430.0 462.0 32.0 105.0 8.1 253.0 8.6 104.0 15.2 441.0 28.3 308.0 11.1 133.0 17.2 43 141.4 177.0 35.6 46.0 9.7 85.0 10.1 46.0 15.8 167.0 31.0 116.0 12.3 51.0 18.7 44 30.4 61.0 30.6 11.0 6.7 25.0 8.5 25.0 15.5 57.0 26.7 28.0 8.9 29.0 17.8 45 35.6 69.0 33.4 11.0 8.8 28.0 9.1 30.0 15.5 65.0 29.7 23.0 12.2 42.0 17.5 46 39.2 78.0 38.8 19.0 12.8 38.0 9.9 21.0 16.1 70.0 33.8 45.0 16.0 25.0 17.9 47 - - - - - - - - - - - - - - - 48 72.4 113.0 41.6 35.0 11.9 51.0 11.0 27.0 18.7 102.0 36.7 70.0 15.2 32.0 21.6 49 20.8 53.0 32.2 11.0 7.9 29.0 8.7 13.0 15.6 50.0 27.8 28.0 10.5 22.0 17.3 50 151.3 186.0 34.7 47.0 9.1 95.0 9.3 44.0 16.3 177.0 30.6 118.0 11.5 59.0 19.1 51 57.5 93.0 35.5 25.0 9.8 46.0 10.1 22.0 15.6 87.0 31.3 59.0 13.3 28.0 18.0 52 17.9 65.0 47.7 19.0 14.2 28.0 13.5 18.0 19.9 58.0 42.5 37.0 19.0 21.0 23.5 53 75.6 91.0 15.4 22.0 4.8 38.0 4.2 31.0 6.3 80.0 13.6 41.0 6.3 39.0 7.3

TABLE 15 — Continued

Masterid Net B Counts Raw Counts B-band S1-band S2-band H-band Bc-band Sc-band Hc-band (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16)

54 63.1 107.0 43.9 34.0 13.9 46.0 12.1 27.0 17.9 96.0 39.1 59.0 18.8 37.0 20.2 55 30.7 67.0 36.3 19.0 9.7 28.0 10.7 20.0 15.9 62.0 32.1 37.0 13.9 25.0 18.2 56 94.4 141.0 46.6 32.0 14.9 76.0 13.1 33.0 18.6 135.0 41.3 87.0 20.1 48.0 21.2 57 54.7 98.0 43.3 15.0 12.9 43.0 11.2 40.0 19.2 90.0 38.1 44.0 16.5 46.0 21.6 58 17.0 59.0 41.3 19.0 12.0 23.0 11.6 17.0 17.6 52.0 36.2 32.0 16.1 20.0 20.1 59 34.7 86.0 50.8 18.0 17.9 48.0 15.0 20.0 17.9 82.0 45.6 53.0 24.8 29.0 20.8 60 48.9 79.0 30.1 25.0 6.9 30.0 8.7 24.0 14.5 69.0 27.1 38.0 10.7 31.0 16.4 61 - - - - - - - - - - - - - - - 62 25.9 35.0 9.1 21.0 3.1 11.0 2.7 3.0 3.4 26.0 8.4 22.0 4.5 4.0 3.9 63 142.9 178.0 35.1 35.0 10.0 86.0 9.4 57.0 15.6 172.0 31.1 107.0 13.5 65.0 17.6 64 29.5 37.0 7.5 13.0 2.1 16.0 2.1 8.0 3.3 35.0 6.6 26.0 2.8 9.0 3.7 65 103.3 118.0 14.7 31.0 5.0 61.0 4.2 26.0 5.5 111.0 13.1 76.0 7.0 35.0 6.1 66 155.7 168.0 12.3 42.0 4.0 89.0 3.6 37.0 4.7 162.0 10.9 115.0 5.7 47.0 5.2 67 139.1 173.0 33.9 16.0 9.2 92.0 9.2 65.0 15.6 167.0 29.8 85.0 11.8 82.0 18.0 68 205.5 246.0 40.7 66.0 11.7 111.0 10.7 69.0 18.3 228.0 35.5 140.0 14.9 88.0 20.6 69 78.7 109.0 30.3 23.0 8.2 55.0 8.3 31.0 13.9 101.0 26.3 60.0 10.4 41.0 15.9 70 34.5 89.0 54.9 23.0 18.5 38.0 17.4 28.0 19.0 80.0 49.3 40.0 27.9 40.0 21.4 71 110.5 142.0 31.5 28.0 7.4 63.0 9.0 51.0 15.2 133.0 28.2 70.0 10.0 63.0 18.2 72 244.3 276.0 31.7 74.0 7.7 128.0 9.6 74.0 14.4 262.0 28.2 172.0 11.2 90.0 16.9 73 141.3 185.0 44.3 43.0 14.6 96.0 12.9 46.0 16.7 174.0 38.8 114.0 19.7 60.0 19.1 74 77.0 88.0 11.0 24.0 3.4 40.0 3.0 24.0 4.6 80.0 9.4 53.0 4.1 27.0 5.3 75 27.3 61.0 33.7 15.0 8.0 26.0 8.9 20.0 16.9 51.0 30.2 24.0 11.8 27.0 18.5 76 268.2 317.0 49.0 83.0 16.0 160.0 15.1 74.0 17.9 301.0 43.0 204.0 22.8 97.0 20.2 77 14.7 59.0 43.5 9.0 13.1 26.0 12.2 24.0 18.2 57.0 38.6 30.0 17.7 27.0 20.8 78 245.7 282.0 36.3 68.0 9.4 140.0 9.9 74.0 17.0 271.0 32.1 181.0 12.5 90.0 19.5 79 - - - - - - - - - - - - - - - 80 53.6 67.0 13.4 21.0 4.8 30.0 3.8 16.0 4.7 61.0 11.6 41.0 6.4 20.0 5.2 81 71.9 99.0 27.1 30.0 11.3 36.0 8.3 33.0 7.5 92.0 24.0 55.0 16.0 37.0 8.1 82 26.0 35.0 9.0 9.0 3.3 16.0 2.5 10.0 3.2 32.0 7.9 21.0 4.3 11.0 3.6 83 240.9 288.0 48.0 86.0 15.4 144.0 14.9 58.0 17.7 275.0 41.8 193.0 21.9 82.0 19.9 84 168.7 184.0 15.3 46.0 6.0 92.0 4.6 46.0 4.7 177.0 13.8 119.0 8.5 58.0 5.3 85 154.0 171.0 17.0 39.0 6.6 95.0 5.3 37.0 5.1 164.0 15.2 117.0 9.2 47.0 5.9 86 54.5 71.0 16.5 17.0 6.5 42.0 5.6 12.0 4.3 66.0 14.8 47.0 10.0 19.0 4.8 87 59.8 94.0 33.7 11.0 8.5 40.0 8.6 43.0 16.7 91.0 30.0 43.0 11.3 48.0 18.7 88 76.5 107.0 30.5 33.0 13.3 54.0 9.2 20.0 8.1 99.0 28.1 72.0 19.2 27.0 9.0 89 - - - - - - - - - - - - - - - 90 22.9 59.0 36.1 16.0 10.0 24.0 10.5 19.0 15.7 55.0 31.8 31.0 13.4 24.0 18.3 91 93.1 128.0 34.9 56.0 14.2 55.0 12.3 17.0 8.4 114.0 31.0 92.0 21.3 22.0 9.7 92 25.5 34.0 8.5 4.0 3.0 19.0 2.5 11.0 3.0 33.0 7.4 19.0 4.1 14.0 3.3 93 25.6 69.0 43.4 24.0 12.3 20.0 11.9 25.0 19.2 61.0 38.4 31.0 17.3 30.0 21.1 94 35.9 55.0 19.5 6.0 4.9 24.0 4.9 25.0 9.7 54.0 17.3 26.0 6.5 28.0 10.8 95 11.9 46.0 34.1 7.0 8.9 18.0 10.3 21.0 14.8 44.0 30.5 18.0 13.1 26.0 17.4 96 859.2 908.0 48.8 194.0 14.6 512.0 15.0 202.0 19.1 867.0 43.0 595.0 21.4 272.0 21.7 97 43.9 76.0 32.1 16.0 7.9 30.0 9.1 30.0 15.1 71.0 28.5 35.0 11.1 36.0 17.4 98 306.4 348.0 41.6 75.0 18.7 194.0 13.2 79.0 9.7 335.0 36.9 226.0 25.5 109.0 11.4 99 256.7 347.0 90.3 119.0 43.4 160.0 30.5 68.0 16.5 324.0 82.2 240.0 62.8 84.0 19.4 100 118.8 179.0 59.4 58.0 23.0 77.0 16.7 44.0 19.7 162.0 53.3 103.0 30.9 59.0 22.4 101 175.3 263.0 87.7 88.0 43.9 121.0 31.4 54.0 12.4 228.0 79.7 159.0 64.2 69.0 15.6 102 26.5 103.0 76.2 47.0 29.6 35.0 25.0 21.0 21.5 91.0 67.7 65.0 43.5 26.0 24.2 103 175.2 218.0 42.8 46.0 11.8 101.0 12.6 71.0 18.4 204.0 37.8 123.0 17.1 81.0 20.7 104 134.2 200.0 65.8 69.0 32.3 92.0 22.3 39.0 11.2 190.0 59.8 137.0 46.8 53.0 13.0 105 - - - - - - - - - - - - - - - 106 139.1 258.0 118.9 103.0 57.3 125.0 47.3 30.0 14.2 242.0 108.1 202.0 90.9 40.0 17.2 107 46.6 76.0 29.4 15.0 6.8 40.0 7.8 21.0 14.9 73.0 26.2 46.0 9.6 27.0 16.6

TABLE 15 — Continued

Masterid Net B Counts Raw Counts B-band S1-band S2-band H-band Bc-band Sc-band Hc-band (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16)

108 133.5 172.0 38.5 37.0 10.2 93.0 10.1 42.0 18.2 166.0 34.2 113.0 13.7 53.0 20.5 109 73.4 159.0 85.2 55.0 35.9 74.0 26.8 30.0 22.5 147.0 76.4 108.0 50.0 39.0 26.4 110 81.9 147.0 65.0 43.0 19.4 75.0 22.7 29.0 22.9 137.0 59.2 98.0 33.0 39.0 26.2 111 81.4 134.0 52.6 48.0 18.5 67.0 16.0 19.0 18.2 124.0 47.0 97.0 26.3 27.0 20.7 112 8.2 42.0 33.6 11.0 7.3 10.0 9.7 21.0 16.6 38.0 30.1 15.0 11.4 23.0 18.7 113 13.4 57.0 43.6 21.0 12.3 20.0 12.8 16.0 18.4 47.0 38.6 28.0 18.0 19.0 20.6 114 192.6 248.0 55.4 87.0 27.3 118.0 19.0 43.0 9.1 239.0 50.3 185.0 39.7 54.0 10.5 115 30.7 83.0 52.3 23.0 17.7 36.0 15.2 24.0 19.4 78.0 46.6 49.0 24.7 29.0 21.9 116 89.0 146.0 57.0 40.0 28.6 79.0 19.3 27.0 9.1 140.0 51.3 106.0 41.1 34.0 10.3 117 48772.2 49127.0 354.8 17276.0 166.9 25183.0 129.9 6668.0 58.1 45815.0 321.1 36317.0 251.7 9498.0 69.4 118 372.0 415.0 43.0 95.0 18.2 228.0 12.6 92.0 12.2 390.0 38.2 270.0 23.8 120.0 14.4 119 1275.8 1532.0 256.2 358.0 125.6 809.0 105.9 365.0 24.6 1482.0 235.3 1007.0 204.5 475.0 30.8 120 621.0 946.0 325.0 314.0 154.4 479.0 135.4 153.0 35.1 897.0 298.1 692.0 253.5 205.0 44.6 121 55.0 90.0 34.8 25.0 8.0 37.0 9.5 28.0 17.4 87.0 30.9 55.0 11.5 32.0 19.4 122 20.8 53.0 32.2 17.0 7.4 22.0 7.3 14.0 17.6 50.0 28.5 32.0 9.3 18.0 19.2 123 - - - - - - - - - - - - - - - 124 164.1 242.0 77.9 90.0 36.2 129.0 27.1 23.0 14.5 230.0 70.4 197.0 53.8 33.0 16.6 125 101.4 148.0 46.4 32.0 13.2 71.0 13.9 45.0 19.4 140.0 41.0 81.0 19.9 59.0 21.1 126 69.4 125.0 55.6 46.0 20.5 45.0 17.3 34.0 17.8 110.0 49.6 69.0 28.7 41.0 20.8 127 72.7 98.0 25.3 36.0 10.8 49.0 9.0 13.0 5.5 92.0 22.7 71.0 15.8 21.0 7.0 128 120.6 209.0 88.4 104.0 41.9 75.0 35.2 30.0 11.4 197.0 79.7 161.0 65.8 36.0 13.9 129 114.4 156.0 41.6 62.0 17.3 73.0 16.7 21.0 7.6 148.0 37.1 126.0 26.3 22.0 10.7 130 65.1 116.0 50.9 28.0 16.8 54.0 15.9 34.0 18.1 110.0 46.1 72.0 25.0 38.0 21.1 131 30.7 42.0 11.3 20.0 4.4 15.0 3.5 7.0 3.4 38.0 10.0 30.0 6.1 8.0 4.0 132 264.8 446.0 181.2 169.0 83.7 203.0 80.1 74.0 17.4 422.0 166.3 325.0 145.2 97.0 21.0 133 311.9 346.0 34.1 74.0 8.2 175.0 9.3 97.0 16.6 339.0 30.5 219.0 11.6 120.0 18.9 134 64.2 76.0 11.8 23.0 3.2 33.0 3.7 20.0 4.9 72.0 10.6 49.0 5.0 23.0 5.5 135 113.6 154.0 40.4 55.0 18.8 71.0 13.9 28.0 7.7 149.0 37.0 112.0 28.2 37.0 8.8 136 - - - - - - - - - - - - - - - 137 96.6 118.0 21.4 28.0 8.4 76.0 9.0 14.0 4.0 114.0 19.3 91.0 13.9 23.0 5.4 138 79.5 126.0 46.5 40.0 20.1 61.0 19.3 25.0 7.1 115.0 42.5 84.0 34.3 31.0 8.1 139 161.6 186.0 24.4 56.0 10.1 112.0 9.7 18.0 4.7 181.0 22.0 152.0 15.8 29.0 6.2 140 296.5 324.0 27.5 81.0 9.6 165.0 8.9 78.0 9.0 310.0 25.1 215.0 14.4 95.0 10.7 141 98.1 141.0 43.2 38.0 13.6 79.0 11.9 24.0 17.7 137.0 38.0 102.0 18.0 35.0 20.0 142 48.7 80.0 31.3 16.0 7.2 37.0 9.0 27.0 15.0 75.0 27.5 47.0 10.2 28.0 17.3 143 98.7 130.0 31.3 7.0 6.8 53.0 8.1 70.0 16.4 127.0 28.0 44.0 9.8 83.0 18.2 144 40.4 82.0 41.7 30.0 11.7 31.0 12.2 21.0 17.8 78.0 36.9 49.0 16.8 29.0 20.1 145 55.0 138.0 83.0 77.0 40.1 44.0 22.8 17.0 20.1 119.0 74.0 97.0 49.9 22.0 24.1 146 1120.3 1192.0 71.7 258.0 32.9 668.0 25.4 266.0 13.4 1169.0 64.0 813.0 49.3 356.0 14.7 147 391.9 460.0 68.1 149.0 30.0 242.0 24.5 69.0 13.6 443.0 61.6 349.0 46.8 94.0 14.8 148 295.1 315.0 19.9 74.0 5.5 161.0 6.8 80.0 7.5 303.0 18.1 200.0 9.3 103.0 8.8 149 - - - - - - - - - - - - - - - 150 32.7 41.0 8.3 8.0 2.5 19.0 2.3 14.0 3.5 40.0 7.4 25.0 3.4 15.0 3.9 151 23.0 57.0 34.0 13.0 7.7 31.0 9.9 13.0 16.5 54.0 30.6 34.0 12.0 20.0 18.6 152 28.9 36.0 7.1 21.0 2.0 8.0 2.4 7.0 2.7 32.0 6.4 25.0 3.4 7.0 3.0 153 39.6 113.0 73.4 35.0 28.1 52.0 28.4 26.0 16.9 103.0 67.7 71.0 46.4 32.0 21.3 154 247.9 292.0 44.1 75.0 17.8 142.0 16.0 75.0 10.3 282.0 39.9 186.0 28.6 96.0 11.4 155 138.5 175.0 36.5 52.0 9.9 79.0 11.3 44.0 15.3 162.0 32.5 110.0 15.3 52.0 17.2 156 52.4 98.0 45.6 28.0 12.0 52.0 15.2 18.0 18.4 89.0 41.1 62.0 20.2 27.0 20.9 157 287.7 342.0 53.9 76.0 16.1 192.0 17.6 74.0 20.2 323.0 49.4 231.0 26.3 92.0 23.2 158 1181.3 1238.0 56.9 267.0 19.7 722.0 17.7 249.0 19.4 1186.0 52.0 840.0 29.6 346.0 22.4 159 34.3 45.0 10.7 8.0 2.8 19.0 3.4 18.0 4.5 42.0 9.7 21.0 4.6 21.0 5.1 160 103.2 147.0 43.8 33.0 12.5 70.0 13.4 44.0 17.9 138.0 39.8 84.0 18.8 54.0 21.0 161 23.7 67.0 42.3 22.0 12.1 28.0 11.8 17.0 18.4 56.0 37.7 32.0 16.6 24.0 21.0

TABLE 15 — Continued

Masterid Net B Counts Raw Counts B-band S1-band S2-band H-band Bc-band Sc-band Hc-band (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16)

162 105.3 155.0 49.7 54.0 16.6 69.0 15.9 32.0 17.2 137.0 45.2 100.0 25.6 37.0 19.6 163 583.0 641.0 57.2 133.0 20.1 346.0 17.3 162.0 19.8 615.0 52.2 396.0 29.8 219.0 22.4 164 48.2 84.0 35.8 20.0 8.0 39.0 10.9 25.0 16.9 79.0 32.5 50.0 13.3 29.0 19.2 165 62.3 73.0 10.7 30.0 2.6 35.0 3.6 8.0 4.5 66.0 9.7 55.0 4.5 11.0 5.2 166 101.3 149.0 47.7 44.0 12.4 60.0 15.4 45.0 19.9 137.0 43.9 88.0 20.4 49.0 23.5 167 39.6 50.0 10.4 16.0 3.0 19.0 3.1 15.0 4.4 48.0 9.2 32.0 4.2 16.0 5.0 168 41.0 51.0 10.0 10.0 2.4 28.0 3.4 13.0 4.2 51.0 9.2 33.0 4.2 18.0 5.0 169 140.6 178.0 37.4 64.0 8.2 89.0 11.1 25.0 18.1 166.0 33.7 132.0 13.2 34.0 20.5 170 109.3 146.0 36.7 37.0 9.0 68.0 11.6 41.0 16.0 136.0 32.7 91.0 14.2 45.0 18.5 171 62.5 98.0 35.5 30.0 8.1 46.0 10.8 22.0 16.6 90.0 31.5 63.0 12.5 27.0 19.1 172 35.3 74.0 39.1 24.0 10.9 22.0 11.9 28.0 16.3 66.0 35.2 38.0 16.3 28.0 18.8 173 - - - - - - - - - - - - - - - 174 32.8 74.0 41.0 19.0 10.7 44.0 13.1 11.0 17.2 69.0 36.8 53.0 17.4 16.0 19.5 175 34.4 78.0 43.2 24.0 11.0 30.0 14.6 24.0 17.5 72.0 39.3 42.0 18.3 30.0 20.9 176 16.0 49.0 33.0 11.0 7.2 18.0 9.2 20.0 16.6 45.0 29.6 18.0 10.9 27.0 18.7 177 - - - - - - - - - - - - - - - 178 29.2 78.0 48.8 32.0 14.7 23.0 15.3 23.0 18.8 68.0 44.6 41.0 23.6 27.0 21.0 179 113.5 127.0 13.5 30.0 3.4 66.0 4.4 31.0 5.7 119.0 12.2 73.0 5.7 46.0 6.5 180 31.2 79.0 47.8 28.0 14.7 28.0 14.1 23.0 19.0 76.0 43.1 44.0 22.0 32.0 21.1 181 64.2 102.0 38.3 18.0 11.2 56.0 11.2 28.0 15.9 96.0 33.7 63.0 15.9 33.0 17.9 182 56.8 68.0 11.2 15.0 3.5 36.0 3.1 17.0 4.6 63.0 10.0 41.0 4.9 22.0 5.1 183 64.9 98.0 33.1 19.0 9.0 43.0 8.8 36.0 15.4 89.0 29.0 47.0 11.4 42.0 17.6 184 1109.6 1148.0 38.4 206.0 9.7 638.0 11.7 304.0 17.1 1114.0 33.9 717.0 14.5 397.0 19.4 185 538.6 586.0 47.0 100.0 14.0 338.0 13.0 148.0 20.0 568.0 42.4 371.0 20.3 197.0 22.2 186 46.3 89.0 42.7 25.0 12.1 38.0 13.1 26.0 17.5 79.0 38.8 48.0 19.0 31.0 19.8 187 143.7 186.0 42.3 45.0 11.6 93.0 12.6 48.0 18.0 179.0 37.9 119.0 17.5 60.0 20.4 188 13.0 50.0 37.0 14.0 8.7 19.0 11.2 17.0 17.1 46.0 32.6 27.0 13.1 19.0 19.5 189 136.2 176.0 40.1 45.0 13.0 89.0 11.1 42.0 16.0 166.0 35.4 113.0 17.4 53.0 18.0 190 139.3 176.0 36.7 36.0 8.7 101.0 10.6 39.0 17.4 168.0 33.4 111.0 13.6 57.0 19.8 191 103.3 142.0 38.7 39.0 11.3 61.0 10.8 42.0 16.6 129.0 34.6 81.0 16.5 48.0 18.1 192 32.8 70.0 37.2 15.0 9.2 29.0 11.7 26.0 16.3 67.0 33.9 37.0 15.0 30.0 18.9 193 28.2 67.0 38.8 19.0 10.8 22.0 10.4 26.0 17.6 61.0 34.8 30.0 15.3 31.0 19.5 194 598.4 636.0 37.3 150.0 11.6 343.0 9.4 143.0 16.3 608.0 33.1 419.0 14.6 189.0 18.5 195 117.5 153.0 35.5 36.0 7.3 80.0 9.6 37.0 18.6 143.0 31.9 90.0 11.1 53.0 20.8 196 41.9 71.0 29.1 27.0 7.5 27.0 6.8 17.0 14.8 65.0 26.0 40.0 9.6 25.0 16.4 197 58.5 94.0 35.5 20.0 10.2 46.0 9.9 28.0 15.5 87.0 32.0 44.0 14.4 43.0 17.7 198 15.5 49.0 33.5 8.0 7.9 18.0 8.6 23.0 17.0 45.0 29.6 18.0 11.1 27.0 18.5 199 34.5 70.0 35.5 20.0 9.9 24.0 9.7 26.0 15.8 68.0 32.0 35.0 14.0 33.0 18.0 200 15.3 49.0 33.7 15.0 8.8 11.0 8.5 23.0 16.4 44.0 29.7 20.0 10.9 24.0 18.7 201 42.3 75.0 32.7 11.0 8.5 21.0 8.1 43.0 16.1 70.0 29.7 20.0 12.0 50.0 17.7 202 91.8 124.0 32.2 20.0 7.4 67.0 7.9 37.0 16.8 120.0 28.7 75.0 10.0 45.0 18.7 203 72.1 103.0 30.9 26.0 7.5 50.0 7.8 27.0 15.6 95.0 26.9 63.0 9.4 32.0 17.5 204 336.2 370.0 33.8 111.0 9.9 200.0 8.6 59.0 15.2 348.0 30.1 264.0 13.0 84.0 17.0 205 77.2 112.0 34.8 20.0 8.0 63.0 10.0 29.0 16.8 106.0 30.9 72.0 11.6 34.0 19.3 206 31.4 66.0 34.6 16.0 8.0 26.0 10.3 24.0 16.3 62.0 30.5 35.0 11.6 27.0 18.9 207 12.9 48.0 35.1 13.0 8.2 23.0 9.7 12.0 17.2 42.0 32.0 28.0 12.4 14.0 19.6 208 45.6 79.0 33.4 13.0 7.5 42.0 8.6 24.0 17.2 73.0 30.1 41.0 10.6 32.0 19.5 209 196.9 230.0 33.1 18.0 7.9 119.0 8.9 93.0 16.4 225.0 29.4 107.0 10.9 118.0 18.5 210 50.2 59.0 8.8 16.0 2.0 27.0 2.5 16.0 4.3 58.0 7.6 38.0 2.7 20.0 5.0 211 57.1 90.0 32.9 19.0 8.1 42.0 9.3 29.0 15.5 84.0 29.8 50.0 11.7 34.0 18.1 212 22.3 54.0 31.9 14.0 7.0 23.0 9.4 17.0 15.4 50.0 28.4 30.0 10.5 20.0 17.9 213 89.3 122.0 32.8 30.0 7.3 37.0 8.9 55.0 16.6 117.0 29.1 59.0 10.0 58.0 19.2 214 18.5 24.0 5.5 6.0 1.3 8.0 1.5 10.0 2.8 24.0 4.8 14.0 1.5 10.0 3.3 215 25.1 57.0 31.9 10.0 7.8 26.0 7.9 21.0 16.2 54.0 28.7 30.0 10.1 24.0 18.7

TABLE 15 — Continued

Masterid Net B Counts Raw Counts B-band S1-band S2-band H-band Bc-band Sc-band Hc-band (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (Src ) (Bkg ) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16)

216 102.3 139.0 36.7 30.0 8.7 74.0 9.8 35.0 18.2 134.0 32.9 92.0 12.8 42.0 20.2 217 46.4 79.0 32.0 17.0 7.7 44.0 8.5 18.0 15.8 74.0 28.4 50.0 10.2 24.0 18.2 218 22.8 53.0 30.0 11.0 7.2 22.0 8.1 20.0 14.7 50.0 26.0 26.0 8.8 24.0 17.2 219 29.5 67.0 37.5 16.0 9.2 26.0 10.2 25.0 18.1 62.0 33.4 33.0 12.6 29.0 20.8 220 340.2 370.0 29.8 104.0 7.7 189.0 7.6 77.0 14.5 351.0 26.7 256.0 10.2 95.0 16.5 221 - - - - - - - - - - - - - - - 222 - - - - - - - - - - - - - - - 223 79.2 109.0 29.8 19.0 7.1 49.0 8.2 41.0 14.5 105.0 26.4 59.0 9.6 46.0 16.8 224 - - - - - - - - - - - - - - - 225 188.2 224.0 35.8 57.0 9.4 111.0 9.5 56.0 16.8 213.0 31.8 145.0 13.1 68.0 18.7 226 50.1 81.0 30.9 20.0 7.1 35.0 8.3 26.0 15.5 74.0 27.0 39.0 9.2 35.0 17.8 227 325.0 358.0 33.7 75.0 7.6 184.0 9.0 99.0 17.1 355.0 30.4 227.0 11.6 128.0 18.7 228 506.0 541.0 34.7 88.0 7.7 310.0 9.9 143.0 17.1 528.0 31.2 334.0 12.0 194.0 19.1 229 158.3 192.0 33.7 45.0 7.8 92.0 9.0 55.0 16.9 185.0 30.5 122.0 11.6 63.0 18.9 230 104.6 136.0 31.4 27.0 7.3 74.0 8.9 35.0 15.3 130.0 28.0 85.0 10.7 45.0 17.3 231 120.7 150.0 29.3 29.0 7.1 80.0 8.3 41.0 13.9 142.0 25.9 93.0 9.5 49.0 16.3 232 35.8 70.0 33.3 39.0 8.3 12.0 10.3 19.0 14.7 49.0 29.4 25.0 12.1 24.0 17.3 233 62.3 93.0 30.5 19.0 6.9 49.0 8.2 25.0 15.3 87.0 27.2 57.0 9.4 30.0 17.8 234 43.9 55.0 11.1 4.0 2.5 20.0 3.3 31.0 5.3 55.0 9.9 18.0 3.7 37.0 6.2 235 7.5 36.0 28.5 6.0 7.7 18.0 7.3 12.0 13.5 33.0 25.2 17.0 9.9 16.0 15.4 236 28.9 62.0 33.1 8.0 8.7 27.0 8.2 27.0 16.1 60.0 29.3 28.0 11.4 32.0 17.9

NOTE. — Col. (1): Master ID, cols. (2): net broad-band counts. Cols. (3), (5), (7), (9), (11), (13) and (15): raw source counts in each of the 7 energy bands (see Table 2 for definitions of these bands), cols. (4), (6), (8), (10), (12), (14) and (16): background counts in each of the 7 energy bands. In some instances background counts are very low. For these sources standard aperture photometry results in negative net counts, so, instead, the source cell determined by wavdetect has been used. This results in a large area ratio between the background and source regions and therefore a low background count value is derived.

FIG. 1.— Top: An optical image of NGC 4278, with the outline of the total area covered by the ACIS-S3 chips, the region overlapped by all six of the pointings and the D_{25} ellipse of this galaxy shown in white. Also overlaid within the overlap region are the full band adaptively smoothed, X-ray contours. Bottom: A ‘true color’ image of the galaxy, where red corresponds to 0.3−0.9 keV, green to 0.9−2.5 keV and blue to 2.5−8.0 keV. The D_{25} ellipse of this galaxy is also shown.

FIG. 2.— Left: Histogram of the separation between sources detected in the co-added observation and sources detected in single observations. Right: Histogram of the ratio of separation between sources detected in the co-added observation and sources detected in single observations, divided by the combined position uncertainty of these sources.

FIG. 3.— The main image presents a full band, raw (unsmoothed, with no exposure correction) image from the co-added observation of NGC 4278, with the D_{25} ellipse and the region overlapped by all six observations overlaid. Source region numbering corresponds to the naming convention in Table 3 and regions represent the 95% encircled energy radius at 1.5 keV. The box in the central region indicates the area shown in the next image, the central region of the galaxy, with sources labeled with the same convention as in the main image. The box shown here encloses the nuclear region of the galaxy, where there is a dense population of sources. This is presented in the final image, where these individual sources can be more clearly seen.

FIG. 4.— X-ray source density profile compared to the optical profile. The histogram indicates the X-ray data and the thick black line is the I-band surface brightness best fit of Cappellari et al. (2006). The vertical dashed line is the D_{25} ellipse and the horizontal dot-dashed line indicates the expected number of background sources. The central 1^{′′} has been excluded in this plot due to the excess optical light contribution from the LINER at the center of this galaxy.

FIG. 5.— Left:A histogram of the separation between the co-added X-ray source position and the optical counterpart. Right: Histogram of the ratio of separation divided by the position uncertainty from the X-ray point source for all optical-X-ray correlations with separations smaller than 1^{′′}. Shaded regions indicate correlations with optical objects that have been classified as background sources (details of this classification are given in the text).

FIG. 6.— Full band X-ray images from the co-added observation of NGC 4278. Both images show confirmed GCs from the HST observation indicated by white ‘X’ marks. The top image shows all X-ray sources not correlated with a GC and the bottom image indicates all correlated X-ray sources. Region colors indicate the 0.3−8.0 keV luminosity of the source from the co-added observation; yellow regions indicate L_X≥1×10^{38}erg s^{−1}, red regions have 1×10^{38} ≥L_X≥1×10^{37}erg s^{−1}, and cyan regions show sources with L_X≤1×10^{37}erg s^{−1}. Also shown in white are the D_{25} ellipse and the HST FOV.

FIG. 7.— Plots of the the 236 detected sources, summarizing the variations in properties of each source between each observation. In the top panel the long-term light curves are shown. In the second panel down, the hardness ratios are indicated. These are defined to be HR = Hc−Sc/Hc+Sc, where Hc is the number of counts in the hard band (2.0−8.0 keV) and Sc is the number of counts in the soft band (0.5−2.0 keV). These bands have been selected to show comparisons with HR ratios derived in the literature. In the third and fourth panels the color ratios; C21 and C32, are plotted, where C21=logS2+logS1 and C32=−logH+logS2. For the color ratios the bandwidths are defined to be S1=0.3−0.9 keV, S2=0.9−2.5 keV and H=2.5−8.0 keV. In cases where a source was not detected in a single observation, an upper limit of the X-ray luminosity is indicated, this is the 90% completeness limit for that observation. In all panels the green horizontal line indicates the value derived from the co-added observation. The blue horizontal line indicates the 90% completness limit for instances where no source was detected in the co-added observation.

FIG. 8.— HR−L_X plots for each source detected in more that one individual observation, with each observation plotted in a different color; observation 1 is magenta, observation 2 is green, observation 3 blue, observation 4 red, observation 5 cyan and observation 6 is dark green. The HR and L_X values for the co-added observation are also shown, plotted in black. The hardness ratios are defined to be HR = Hc−Sc/Hc+Sc, where Hc is the number of counts in the hard band (2.0−8.0 keV) and Sc is the number of counts in the soft band (0.5−2.0 keV).

FIG. 9.— Color-color plots for each source that has been detected in more than one pointing. Each individual observation is plotted in a different color; observation 1 is magenta, observation 2 is green, observation 3 blue, observation 4 red, observation 5 is cyan and observation 6 is dark green. The co-added observation is also plotted in black. The color ratios; C21 and C32, are plotted, where C21=logS2+logS1 and C32=−logH+logS2. For the color ratios the bandwidths are defined to be S1=0.3−0.9 keV, S2=0.9−2.5 keV and H=2.5−8.0 keV.

FIG. 10.— The top figure presents the L_X distribution of the 236 sources detected within the overlapping region, covered by all six Chandra pointings. The unshaded histogram indicates all detected sources. The lightly shaded (gray) region shows all variable sources (including both transient classes). The darker (green) histogram indicates sources associated with a GC and the darkest (blue) histogram shows varying sources that have a confirmed GC counterpart. The bottom left image indicates the same 236 sources, but for those with S/N<3, 3σ upper limit values have been used in place of L_X. The bottom right image presents these upper limit values only. The shading for these two figures are the same as described for the main histogram.

FIG. 11.— The color-color diagram of the X-ray point sources detected in the co-added observation. In the top panel color-color values are plotted, with the sources divided into luminosity bins, with symbols of each bin indicated by the labeling in the panel. Variability is also indicated, where variable sources are shown in blue, non-variable source are indicated in green and source that have insufficient counts to identify variability are shown in cyan. In the lower panel the error values for each of the sources are presented. In both of the panels, the grid indicates the predicted locations of the sources at redshift z=0 with various photon indices (0≤ Γ_{ph} ≤ 4, from top to bottom.) and absorption column densities (10^{20} ≤N_H ≤ 10^{22} cm^{−2}, from right to left).

FIG. 12.— The top panel presents the L_X-HR diagram of the X-ray point sources detected in the co-added observation. The second panel shows the L_X-C21 plot for this population and the bottom panel shows the L_X-C32 values. In all three panels the variable sources are plotted in blue, non-variable sources in green and the sources without determined variability are plotted in cyan.