arXiv:0903.0721v2 [astro-ph.GA] 5 May 2009

Astronomy & Astrophysics manuscript no. 9692 © ESO 2023 December 27, 2023

The spiral structure of our Milky Way Galaxy

L. G. Hou^{1,2}, J. L. Han^1, and W. B. Shi^{1,3}

1 National Astronomical Observatories, Chinese Academy of Sciences, Jia-20, DaTun Road, Chaoyang District, Beijing 100012, China 2 Department of Physics, School of Physics, Peking University, Beijing 100871, China 3 Department of Space Science and Applied Physics, Shandong University at Weihai, 180 Cultural West Road, Shandong 264209, China

ABSTRACT

Context. The spiral structure of our Milky Way Galaxy is not yet known. HII regions and giant molecular clouds are the most prominent spiral tracers. Models with 2, 3 or 4 arms have been proposed to outline the structure of our Galaxy. Aims. Recently, new data of spiral tracers covering a larger region of the Galactic disk have been published. We wish to outline the spiral structure of the Milky way using all tracer data.

Methods. We collected the spiral tracer data of our Milky Way from the literature, namely, HII regions and giant molecular clouds (GMCs). With weighting factors based on the excitation parameters of HII regions or the masses of GMCs, we fitted the distribution of these tracers with models of two, three, four spiral-arms or polynomial spiral arms. The distances of tracers, if not available from stellar or direct measurements, were estimated kinetically from the standard rotation curve of Brand & Blitz (1993) with R_0=8.5 kpc, and Θ_0=220 km s^{−1} or the newly fitted rotation curves with R_0=8.0 kpc and Θ_0=220 km s^{−1} or R_0=8.4 kpc and Θ_0=254 km s^{−1}. Results. We found that the two-arm logarithmic model cannot fit the data in many regions. The three- and the four-arm logarithmic models are able to connect most tracers. However, at least two observed tangential directions cannot be matched by the three- or four-arm model. We composed a polynomial spiral arm model, which can not only fit the tracer distribution but also match observed tangential directions. Using new rotation curves with R_0=8.0 kpc and Θ_0=220 km s^{−1} and R_0=8.4 kpc and Θ_0=254 km s^{−1} for the estimation of kinematic distances, we found that the distribution of HII regions and GMCs can fit the models well, although the results do not change significantly compared to the parameters with the standard R_0 and Θ_0.

Key words. Galaxy: structure — Galaxy: kinematics dynamics – HII region — ISM: clouds

1. Introduction

The Milky Way galaxy is known to be a spiral galaxy, but its detailed spiral structure has not been well revealed. The Milky Way may have two arms, or three arms, or even more complicated structures (Vallée 2008). At present, the number of arms and arm parameters (i.e. the pitch angle and the initial Galactocentric radius) have not been well determined. Nevertheless, some consensus on the Galactic structure has been reached (Russeil 2003, hereafter R03): (1) the tangential directions of the spiral arms have been identified from the maxima of the thermal radio continuum and molecular emission (see Table 1 in Englmaier & Gerhard, 1999 or Table 2 in Vallée, 2008); (2) the Sagittarius arm and the Carina arm are linked as a single arm; (3) the Sun lies between the Perseus arm and Sagittarius arm.

To outline the structure of our Galaxy, one should use all reliable tracers with accurate distances. Primary tracers are:

(1) HII regions. HII regions are the birthplace of young stars. They are clouds of atomic hydrogen ionized by bright young stars. Their radio emission cannot be attenuated by dust extinction, and therefore they can be detected even in distant parts of the Galactic plane. Georgelin & Georgelin (1976) investigated the distribution of the available sample of HII regions that time, and outlined four segments of arms. Downes et al. (1980) observed more HII regions in the first quadrant and Caswell & Haynes (1987) reported comprehensive data of southern HII regions in the Galaxy over the Galactic lon-

Send offprint requests to: J.L. Han: hjl@bao.ac.cn gitude l = 210^∘ to l = 360^∘, which help to delineate the spiral structure, especially for the Carina arm and the Crux arm.

(2) Giant molecular clouds (GMCs). The GMCs are vast assemblies of molecular gas with a mass of 10^4 ∼ 10^6 M_⊙ and a size of tens of pc. They have an average density of 10^2 ∼ 10^3 cm^{−3} but their core density can reach 10^6 ∼ 10^7 cm^{−3}. Because the interstellar medium is almost optically thin for the CO emission line, distant clouds in the Galactic plane can be detected. Cohen et al. (1986) showed that the GMCs are good tracers of the Carina arm. Dame et al. (1986) solved the distance ambiguity of some GMCs in the first quadrant, and used them to outline the Sagittarius arm. Solomon et al. (1987) studied warm molecular clouds in the first quadrant, and delineated three armlike structures, the Perseus arm, the Sagittarius arm and another possible one, the Scutum arm. Grabelsky et al. (1988) cataloged GMCs over the Galactic longitude from l = 270^∘ to l = 300^∘, and outlined the Sagittarius-Carina arm using GMCs over 23 kpc in the Galactic plane. More GMCs should be identified from the complete CO map of our Galaxy composed by Dame et al. (2001), but unfortunately, this has not yet been done.

In addition, HI gas is one of the major components of the interstellar medium in spiral galaxies. Levine et al. (2006) decomposed the HI data into the smoothed component and perturbed surface density map, and found a spiral structure out to at least 25 kpc. Four arm-segments appear in the outer Milky Way disk.

As shown in external Galaxies, the distribution of the brightest HII regions and of the most massive molecular clouds generally traces the grand design structure. To our knowledge, pre-

2 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

vious authors examining the spiral structure of the Milky Way used only HII regions or GMCs, and none considered all tracers together for spiral structure, except for R03 who considered the complexes of HII regions and molecular clouds. R03 showed the distribution of a large sample of star-forming complexes (constituted by HII regions, ionized patches and/or molecular clouds or the mixture of any two), and fitted it with two, three, or four logarithmic spiral arm models. The four-arm model is slightly more preferable than the three-arm model. We collect a catalog of HII regions and GMCs, and use those tracers together to show the grand design of our Galaxy. In Sect. 2, we discuss spiral tracers and determine their parameters (distance, and the assigned weight - here we mean the weighting factor rather than the mass). In section 3, we present the distribution of the tracers and discuss the models. Conclusions are presented in Sect.4.

2. Tracer data for the Galactic spiral structure

To reveal the structure of our Galaxy, tracers spread over the whole Galactic disk are needed. Also, their distances have to be determined.

2.1. Tracers for the Galactic spiral structure: data

For any tracer in the outer Galaxy, if its stellar distance cannot be determined, one can use the kinematic method to estimate the distance. However, for a tracer in the inner Galaxy, the distance ambiguity is a problem. Two possible distances correspond to the same observed radial velocity. Because the distance ambiguity of HII regions can be resolved by HI/H_2CO emission/absorption observations or the HI self-absorption method (e.g. Anderson & Bania 2009; Tian & Leahy 2008), HII regions are excellent tracers in the inner Galaxy.

In addition to Georgelin & Georgelin (1976), Downes et al. (1980) and Caswell & Haynes (1987) on the spiral structure of the Milky Way using HII regions as spiral tracers, Paladini et al. (2003) collected a catalog of Galactic HII regions, which contained 1442 sources. Paladini et al. (2004) presented a new, detailed analysis of the spatial distribution of some Galactic HII regions. Araya et al. (2002), Watson et al. (2003), and Sewilo et al. (2004) reported simultaneous H110α and H_2CO line observations toward HII regions in the first quadrant and resolved the distance ambiguity. Kuchar & Bania (1994), Kolpak et al. (2003), Fish et al. (2003), Pandian et al. (2008), Anderson & Bania (2009) used HI absorption to resolve the distance ambiguity for other samples of HII regions. R03 established a star-forming complex catalog, and derived Galactic structure. Russeil et al. (2007) revised distances of 32 HII regions.

For GMCs, besides Dame et al. (1986), Solomon et al. (1987) and Grabelsky et al. (1988) for spiral structure of the Milky Way, there are also investigations on Galactic molecular clouds. Mead & Kutner (1988) reported 31 clouds in the first quadrant outside the solar circle. Digel et al. (1990) observed 32 clouds, related to the Outer arm in the first quadrant. Sodroski (1991) studied 35 clouds located in the second, third and fourth quadrants. May et al. (1997) identified 177 clouds in the third quadrant, and shown disk structure as well as warping of the disk. Carpenter et al. (1990) studied 18 molecular clouds in the outer Galactic disk. Brand & Wouterloot (1994) detected a sample of molecular clouds located in the far outer Milky Way. Nakagawa et al. (2005) revealed 70 molecular clouds in the Galactic Warp with a kinematic distance greater than about 14.5 kpc. Heyer et al. (2001) summarized the properties of molecular regions in the outer galaxy from the Five College Radio Astronomy Observatory Outer Galaxy Survey.

We have collected the published data of HII regions and GMCs from the references above, including position, velocity, flux, etc. The stellar distances of HII regions are used when possible, otherwise the kinematic distances are estimated by using three rotation curves (see below), one with the constants R_0 = 8.5 kpc and Θ_0 =220 km s^{−1}, another with R_0 = 8.0 kpc and Θ_0 =220 km s^{−1} and also the new one with R_0 = 8.4 kpc and Θ_0 =254 km s^{−1}. Here R_0 is the distance between the Sun and the Galactic Center, and Θ_0 is the velocity of the Sun circling around the Galactic Center. The excitation parameters of HII regions and the masses of GMCs are estimated and rescaled to the adopted distances. Clouds with a mass less than 10^4 M_⊙ are not massive and will not be considered. We have cross-identified the tracers according to their longitudes, latitudes and velocities to avoid redundancy. We list all related parameters of the tracers with references in Table A.1 and Table A.2 (online version only).

2.2. Rotation curves and distances of tracers

The distance of a given spiral tracer could be best determined by triangulation observations (e.g. Xu et al. 2006, 2008; Brunthaler et al. 2008; Zhang et al. 2008; Reid et al. 2008; Moscadelli et al. 2008). Only a few clouds or HII regions have been so well measured. For many tracers, the distance of the associated bright stars is adopted from the literature. Here, we will use these measurements to verify the rotation curves.

The Galactic rotation curve has been derived from the tracers with their stellar distances and velocities already determined. In the last 20 years, four rotation curves have been used for the spiral structure of the Milky Way: one for the whole Galaxy from Brand & Blitz (1993, hereafter BB93), the two for the north part of the Galaxy from Clemens (1985) and Fich et al. (1989), and the very simple flat rotation curve with Θ = 220 km s^{−1} for the whole Galaxy. R03 obtained a Galactic rotation curve by using his sample of star-forming complexes, which is almost the same as that of BB93.

Using the sources with stellar distances in our collected sample, we verified the four possible rotation curves mentioned above with the IAU standard values, R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}. Similarly to R03, we calculated the parameter τ:

τ = 1 N N� i=1 � (R_i − R_t)^2 σ^2_{Ri} + (ω_i − ω_t)^2 σ^2_{ωi}

. (1)

Here, R_i and ω_i are the Galactocentric distance and the angular rotation velocity of a tracer, respectively, and σ_{Ri} and σ_{ωi} are their uncertainties. R_t, ω_t are the coordinates of the theoretical points. The most appropriate rotation curve should minimize the parameter τ. We found that the rotation curve of Clemens (1985) can indeed minimize the parameter τ for the north part and the whole Galaxy with a polynomial fit. However it fits all the structures of the curve, even those caused by local motions. The τ for the rotation curve of Fich et al. (1989) and the simple flat one are larger than that of BB93 both in the north part and whole Galaxy. The rotation curve of BB93 (i.e. Eq. 2 below with a=1.00767, b=0.0394 and c=0.00712) is reasonable for all data of the whole Galaxy. We will directly adopt it to estimate the kinematic distances of the spiral tracers for the case with R_0=8.5 kpc and Θ_0=220 km s^{−1}.

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 3

Fig. 3. Panel (1) is the distribution of HII regions, Panel (2) is the distribution of GMCs, and Panel (3) is the distribution of HII regions and GMCs together for illustration of the Galactic spiral structure. The solar parameters R_0=8.5 kpc and Θ_0=220 km s^{−1} were adopted. The coordinates originate from the Galactic center, and the Sun is located at (x = 0.0 kpc, y = 8.5 kpc). The open squares indicate the HII regions with the symbol area proportional to exciting parameters. The open circles indicate GMCs with the symbol size proportional to log(M_{GMCs}) (see Sect. 2.3). Panel (4) is the color distribution of both kinds of tracers, each brightened as a Gaussian with the amplitude of the weighting parameter, B, so that the spiral arms are clearly demonstrated.

More and more pieces of evidence of R_0=8.0 kpc and Θ_0=220 km s^{−1} have been found (Reid 1993; Ghez et al. 2008; Eisenhauer et al. 2003; Groenewegen et al. 2008; Gillessen et al. 2009). The change of these constants may affect the kinematic distances of tracers and then affect the derived structure of the Milky Way. Therefore, we fit a new rotation curve with (see Brand & Blitz 1993, R03):

ω/ω_0 = a(R/R_0)^{b−1} + c(R_0/R) (2)

We set the rotation curve to pass through the new R_0 and Θ_0, and set c = 1 − a. By minimizing τ in Eq. 1, we found the best values, a = 1.59073, b = −0.000816. The result is shown in Fig. 1. In Section 3.3, we will use this rotation curve, and also the newly determined one with R_0=8.4 kpc and Θ_0=254 km s^{−1} by Reid et al. (2009), to estimate the kinematic distances and related parameters, and outline the spiral structure. Note that

Gillessen et al. (2009) obtained R_0 = 8.33 ± 0.35 kpc from the combined fitting to observations of 16 years for stellar orbits around the black hole in the Galactic center.

2.3. Tracers of Galactic spiral structure: weights

The brighter the HII region, the better it is as a tracer of spiral structure. We use the excitation parameters of HII regions as a weighting factor to demonstrate spiral structure. Georgelin & Georgelin (1976) delineated four arm-segments using HII regions with an excitation parameter U greater than 70 pc cm^{−2}. R03 used the excitation parameter as a weighting factor in their fitting process. The excitation parameter U (in pc cm^{−2}) is defined as (Schraml & Mezger 1969):

U = 4.5526α(ν, T )^{−1}ν^{0.1}T^{0.35}S_νD^2 (3)

4 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Fig. 1. The rotation curve fitted with solar parameters R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1}. Data are taken from our collected sample listed in Table A.1 and Table A.2.

Here, T is the temperature (in K), S_ν is the radio flux density (in Jy), ν is the frequency (in GHz), D is the distance of the tracers to the Sun (in kpc), and α(ν, T ) is a parameter close to 1 (Schraml & Mezger 1969). We collected the S_ν from the literature when available. The excitation parameter U is then estimated via Eq.(3) using S_ν and assuming T = 8500 K. For a temperature in the range of 7000 ∼10000 K the value of excitation parameter differs by less than about 6%. The distribution of excitation parameters of HII regions in our sample is shown in Fig. 2. It ranges from 5 to 332 pc cm^{−2} with a peak around 50 pc cm^{−2}.

Massive molecular clouds are more concentrated to in the spiral arms than clouds with low masses. The mass of a molecular cloud M_{GMCs} was rescaled with newly adopted distances. The distribution of M_{GMCs} is shown in Fig. 2, ranging from 1×10^4 M_⊙ to 2.5×10^7M_⊙. More clouds have a lower mass.

In order to use the HII regions and GMCs together to outline the spiral structure of our Galaxy, a reasonable match of weighting parameters should be considered to measure their relative importance to the spiral structure. Obviously, a HII region with a higher excitation parameter or a GMC with a larger M_{GMCs} should have a larger value of weight. For the HII regions, we take the weighting parameter B=U/(100 pc cm^{−2}), so that an HII region with U=100 pc cm^{−2} has a weight of 1 in the determination of the spiral pattern, while an HII region with U=200 pc cm^{−2} has a weight of 2. For the GMCs, the weighting parameter is taken to be B = log(M_{GMCs}/10^4 M_⊙), so that the clouds with a mass of 10^5 M_⊙ have a weight of B=1, and clouds of 10^6 M_⊙ have a weight of 2. We have also tried other weighting measures, such as B=U/(50 pc cm^{−2}) and B=2log(M_{GMCs}/10^4 M_⊙), and found that the arm structure is similar but with more emphasis on GMCs.

An additional factor needed in the spiral fitting is the distance uncertainty of each tracer. If the uncertainty of observed stellar distance is known, we use it directly. If the kinematic distance is used, we adopt a systemic velocity uncertainty of ±5km s^{−1}, and then the distance uncertainty can be derived by using a rotation curve. As we search for the best match of spiral arms in X-Y coordinates, distance uncertainty will be expressed in X and Y.

Fig. 2. The distribution of excitation parameters of the HII regions (top panel) and masses of molecular clouds (bottom panel). The rotation curve with R_0=8.5 kpc and Θ_0=220 km s^{−1} was used if the distances of these tracers were estimated kinetically.

We set a fitting weighting factor w_x = 0.5/σ_x and w_y = 0.5/σ_y. We assign all tracers with a distance accuracy better than 0.5 kpc (i.e. σ_x < 0.5 kpc ) to have w_x = 1, and w_y = 1 if σ_y < 0.5 kpc.

3. The spiral arms of the Milky Way

Fig. 3 shows the distribution of tracers for the Galactic spiral structure projected onto the Galactic plane. The sizes of symbols have been scaled according to the weighting factors B obtained from excitation parameter U or cloud mass. GMCs in a large region of the fourth Galactic quadrant have been mapped by Dame et al. (2001), but unfortunately, the discrete GMCs have not been identified and explicitly listed in the literature. To show spiral arms better using available data of HII regions and GMCs, in the fourth panel of Fig. 3, we use a Gaussian function to brighten each tracer through:

L(x, y) = � i B(i) √ 2πσ^2 exp(−

(x_i − x)^2 + (y_i − y)^2 2σ^2

) (4)

Here we took σ=0.2, which means that each tracer will brighten an area with a radius of about 200 pc. This is larger than the

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 5

Fig. 4. The spiral structure of HII regions and GMCs (R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}) is overlaid on the HI map (Levine et al. 2006).

size of a GMC, but we can delineate the spiral structure more clearly. A different value of σ in a suitable range (e.g. 50 pc – 400 pc) produces a similar figure. In the fourth Galactic quadrant, three arm-like structures exist in this region. The Carina arm (l ∼ 290^∘) is very clear. The other two arm-like structures correspond to the Crux (l ∼ 318^∘) and the Norma arm (l ∼ 333^∘), respectively. In the first quadrant, both HII regions and GMCs also seem to show three arm-like structures, the Sagittarius arm in the middle (l ∼ 40^∘), the Scutum arm inside (l ∼ 25^∘) as well as the Perseus arm on the outer side (x ∼ 8 kpc, l ∼ 60^∘). These arms are clear in Watson et al. (2003) and Sewilo et al. (2004) from HII region distributions and in Solomon et al. (1987) from the distribution of molecular clouds. There may be another armlike segment in the far outer Galaxy traced by GMCs. In the second and third Galactic quadrants, no obvious structure can be identified from the distribution of the main tracers.

In Fig. 4, we overlay our data onto the HI map of Levine et al. (2006), which was obtained with the solar parameters of R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}. In the HI distribution, there are 3 obvious arm-like structures in the third and fourth quadrants. The Carina arm overlaps with the most inner armlike structure in the HI distribution, and the Perseus arm may be linked to the intermediate arm-like structure, which can be matched in our 3-arm, 4-arm, and polynomial logarithmic arm models. The counterpart for the outer arm-like structure in the HI map is difficult to identify, but most likely there are one or two spiral arms beyond the Perseus arm.

It is not clear whether the spiral structure of the Milky Way is of logarithmic nature. Canonically, the two, three or four logarithmic arms have been used to fit the tracer data and to model the grand design of our Galaxy. We will try to fit these conventional models to the data, and we also present the polynomial logarithmic arm model with varying pitch angle. In addition to fitting the model to the tracer distribution, it is important to compare the tangential directions of modelled spiral arms to the observed tangents (see Englmaier & Gerhard 1999; Bronfman 1992; Vallée 2008).

Fig. 5. The distribution of HII regions and GMCs (R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}) and the best-fitting two-arm model (top panel), three-arm model (middle panel) and four-arm model (bottom panel).

6 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

In Section 3.3, we also show the distribution of tracers for spiral arms by taking the kinematic distances estimated by using the rotation curves with two sets of solar parameters, R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1} and the recent determination of R_0 = 8.4 kpc and Θ_0 = 254 km s^{−1} from Reid et al. (2009).

3.1. The logarithmic arm models

The logarithmic-arm model describes the i-th spiral arm with: ln r R_i

= (θ − θ_i) tan ψ_i; (5)

Here, r, θ are the polar coordinates centered at the Galactic center, R_i is the initial radius (in kpc) at the start azimuthal angle θ_i for the i-th arm, and ψ_i is the pitch angle of the arm. The θ starts at the positive x-axis and increases counterclockwise. We consider the expression: Z = 1 � B_i � B_i � (x_i − x_t)^2w^2_{xi} + (y_i − y_t)^2w^2_{yi} (6)

for all tracers; here x_i and y_i are Cartesian coordinates of the tracer, x_t and y_t are the coordinates of the nearest point from all spiral arms to the tracer. w_{xi} and w_{yi} are weighting factors for the location uncertainty of x_i and y_i, respectively, and B_i is the weighting factor related to the excitation parameters of HII regions or the masses of GMCs. The best spiral arm model should be able to minimize the parameter Z.

We assume that each arm always has its own pitch angle in the 2-, 3-, 4-arm models and fit them to the data (see also Naoz & Shaviv 2007). By searching for the best parameters of each arm, R_i, θ_i and ψ_i in reasonable ranges, to find the minimized Z, we obtained the best spiral arm models as listed in Table 1. Three best-fitting models together with the data are plotted in Fig. 5. The tangential directions of arms in all models are listed in Table. 2

The best fitting two-arm logarithmic model places the Sun in the Carina arm, and it also connects the Local arm and the Perseus arm with the Carina arm, which is inconsistent with observations. In fact, the connection of the Sagittarius arm and the Carina arm as a single arm has been well established from observations. Such a connection cannot be obtained in any two-arm model, as found by R03. In addition, the tangential directions calculated from this model are also very different from observed values. The parameter Z is slightly larger than that of the 3- and 4- arm models. The best two-arm logarithmic model can be excluded, conclusively.

In the best fitting 3-arm and 4-arm models, the Sagittarius arm and the Carina arm are connected and look very similar. The Scutum arm in the 1st Galactic quadrant outlined by HII regions and molecular clouds is connected to the Crux arm in the 4th Galactic quadrant. This arm is well fitted by both the 3-arm and the 4-arm models. However, the obvious difference arises from the extension of the Crux arm. It connects to the Perseus+1 arm in the 3-arm model, but to the Perseus+2 arm in the the 4-arm model. It is not clear from current available data whether there is one arm or two arms in the few kpc outside the Perseus arm. Conservatively, the 3-arm model predicts only one Perseus+1 arm and no Perseus+2 arm, which may be more realistic. However, Levine et al. (2006) showed that the HI gas distribution indicates that both the Perseus+1 arm and Perseus+2 arm are possible. The molecular clouds at l ∼ 70^∘ at 13 kpc (Digel et al. 1990) may be related to the Perseus+2 arm. In the GC direction, the Norma arm is connected to the Perseus arm

Table 3. The parameters of the polynomial logarithmic arm model.

i-th arm a_i b_i c_i d_i θ_i For distribution with R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1} (^∘) arm-1 1.376 -0.07792 0.04309 0 41 arm-2 7.330 -2.302 0.2849 -0.01059 304 arm-3 10.403 -3.526 0.4620 -0.01895 298 arm-4 1.978 -0.1181 0.02098 0 338 arm-5 2.297 0.09116 0.04273 0 35 Z 0.31 For distribution with R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1} (^∘) arm-1 1.302 -0.06629 0.04115 0 47 arm-2 7.5616 -2.448 0.3090 -0.01187 304 arm-3 9.9843 -3.417 0.4522 -0.01873 298 arm-4 1.5189 -0.00581 0.01286 0 338 arm-5 2.1949 0.1037 0.03317 0 35 Z 0.26 For distribution with R_0 = 8.4 kpc and Θ_0 = 254 km s^{−1} (^∘) arm-1 1.3747 -0.0737 0.04318 0 41 arm-2 11.2880 -3.8678 0.4900 -0.01949 304 arm-3 10.2992 -3.519 0.4662 -0.01937 298 arm-4 1.5645 -0.005055 0.0132 0 338 arm-5 2.2973 0.004478 0.0750 0 55 Z 0.29

Fig. 6. The distribution of tracer data (R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}) plotted in the log(r)-θ diagram. Here θ starts at the positive x-axis and increase counterclockwise. The dash lines roughly separate main arm tracers.

in the 3-arm model. In the 4-arm model, the Norma arm is connected to the Perseus+1 arm, and the Perseus arm starts from another arm inside the Norma arm, corresponding to the Norma- Cygnus arm in the four-arm model of R03.

The tangential directions of arms in models are listed in Table 2 for comparison with observations. The double values of the Scutum tangent correspond to both the Scutum arm and another interior arm segment, which can be well fitted in our 3-arm and 4-arm models. However an obvious deviation is seen from the tangent of the actual Scutum arm (l ∼ 31^∘ vs. l ∼ 36^∘). The tangent of the Sagittarius arm always deviates from observed values by 7^∘ or 4^∘ in the 3-arm or the 4-arm model. The tangent of the Norma arm differs by 4^∘ in the 4-arm models.

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 7

Table 1. The parameters of the best fitting models: the initial radius, R_i, the start azimuthal angle, θ_i, and the pitch angle, ψ_i, for the i-th arm.

model R_1 θ_1 ψ_1 R_2 θ_2 ψ_2 R_3 θ_3 ψ_3 R_4 θ_4 ψ_4 Z (kpc) (^∘) (^∘) (kpc) (^∘) (^∘) (kpc) (^∘) (^∘) (^∘) (^∘) (kpc) For distribution of tracers with R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1} 2-arm model 4.2 147 5.3 4.0 297 5.2 0.47 3-arm model 3.8 40 7.8 3.6 195 9.9 4.0 303 7.5 0.45 4-arm model 3.7 40 9.6 4.5 205 10.7 4.4 290 11.4 3.9 309 8.7 0.35 For distribution of tracers with R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1} 2-arm model 4.0 151 5.1 3.9 315 5.0 0.43 3-arm model 3.6 40 8.0 3.5 195 9.6 3.9 303 7.4 0.41 4-arm model 3.6 40 9.2 3.7 205 12.5 4.2 290 11.1 3.8 309 8.4 0.33

Table 2. Tangential directions from observations (Bronfman 1992; Englmaier & Gerhard 1999) and the best fitting models.

model Scutum Sagittarius Carina Crux Norma 3-kpc (^∘) (^∘) (^∘) (^∘) (^∘) (^∘) observed mean value 25,31 51 284 310 327 339

For distribution of tracers with R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}

2-arm model 33 49 301 319 330 3-arm model 26,36 58 284 313 325 4-arm model 25,36 55 283 311 323 polynomial model 27,33 53 284 309 329 For distribution of tracers with R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1}

2-arm model 33 49 303 320 330 3-arm model 26,38 59 282 311 324 4-arm model 26,37 55 284 310 322 polynomial model 27,34 53 284 309 329 For distribution of tracers with R_0 = 8.4 kpc and Θ_0 = 254 km s^{−1} polynomial model 27,33 53 284 309 329

3.2. The polynomial logarithmic arm model

Note that these spiral arm models are assumed to be purely logarithmic. However, the pitch angle of spiral arms can vary along the arm (see e.g. Seigar & James 1998). If so, a polynomial logarithmic arm model may be necessary to fit both the distribution and tangential directions.

We first plotted the tracer data in the log(r)-θ diagram (see Fig. 6), and roughly identified arm-like features and then separated the data by the dashed-lines. The Sagittarius-Carina arm is very prominent in the plot, which obviously separated in the tracer data from the other groups. The Scutum-Crux arm are also well-isolated in the tracer data, except for those at small r where the data are mixed with those from the Sagittarius arm. The innermost arm seems clearly to have a group of tracers, which in fact is the Norma arm and connected to the Scutum arm. However, outside the Sagittarius-Carina arm, the data are well mixed, and one can barely distinguish the Perseus arm and the Perseus+1 arm, which can only be separated manually in a very rough manner.

The best model should satisfy the observed tangential directions and also minimize the parameter Z. We separate our total sample into several sub-samples for five arms (see Fig. 6), and fit them separately with the polynomial logarithmic arm model:

ln r = a_i + b_iθ + c_iθ^2 + d_iθ^3 (7)

to obtain the initial values of each arm, and finally we fit all arms together to the whole sample of data. After using the weighting factors, and minimizing the residual value by Eq.(6), we obtained the best model with the fitting parameters listed in Table 3.

The data and arms are plotted in Fig. 7. The tangential directions of this model are also listed in Table 2.

In this model, almost all tracers are best connected with the outlined spiral arms. Compared to the pure logarithmic models, the polynomial logarithmic arm model is more conservative in connecting known tracers. It does not outline the possible arm trajectory in the regions without tracers and predict the possible connection between the outer arms and inner arms. As seen in Fig. 7, the main spiral structures are well traced. From the center we find arm-1 to arm-5, which correspond to the Norma arm, the Scutum-Crux arm, the Sagittarius-Carina arm, the Perseus arm and the Perseus+1 arm. Looking at the HI data in Fig. 4, one may see that arm-5, i.e. the Perseus+1 arm, seems to be connected to the obvious outer HI arm outlined by Levine et al. (2006) at the both ends at about (x,y)=(−12 kpc, +12 kpc) and (+8 kpc, +10 kpc). The Perseus arm is probably connected to the long HI arm at (−12 kpc, +3 kpc). The tangential directions of this model (Table 2) are more consistent with the observed values than those from the logarithmic arm model. We conclude that such a polynomial arm model is a better description of the observed arm features.

The pitch angles of spiral arms vary in the form of tan(ψ_i) = b_i + 2c_iθ + 3d_iθ^2, in contrast to the constant pitch angles for the pure logarithmic arms. The pitch angles vary with azimuthal angle, as shown in Fig. 8. Variable pitch angles have been found in nearby galaxies. For example, Puerari & Dottori (1992) used a simple model with a variable pitch angle to obtain the leading or trailing character of the arms of some galaxies. Note, however, that the innermost segments of arm-2 (l <∼ 25^∘) and arm-3 (l <∼ 35^∘), probably due to the distance uncertainty of tracers,

8 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Fig. 7. The best-fitting polynomial logarithmic-arm model (R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}), plotted onto the data distribution (top panel) and the color brightened-tracer image (bottom panel) of tracers. Almost all main tracers are connected by the outlined arms, except for one complex at (x,y)=(12 kpc, 4 kpc) which either has an overestimated distance or it belongs to another outer arm.

show unreasonable negative pitch angles in Fig.8, similar to the possible outer HI arm (x ∼ 10 kpc) in the 1st quadrant as shown in Fig. 4. This is obtained from tracer data, which thus needs to be resolved.

3.3. The influence of the solar parameters R_0 and Θ_0

We also have re-estimated the distances of HII regions and GMCs, if not available from other measurements, by using the rotation curve for R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1}. Then the excitation parameters of HII regions and the masses of GMCs are accordingly recalculated, as listed in Table A.1 and Table A.2. The final distribution of the tracers is shown in Fig. 9. The overall design is similar to that of R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}. We also fit the distribution with two, three, and

Fig. 8. The pitch angle (ψ) variation of spiral arms in the accepted polynomial logarithmic-arm model (with R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}).

four spiral-arm models, and the parameter values from the best models are listed in Table 1. The best fit of a polynomial logarithmic arm model for a spiral structure is presented in Fig. 9, and the parameters are listed in Table 3. The number of arms and arm structure are conserved. As occured for the case of 8.5/220, the tangential directions are better reproduced by the polynomial model than the logarithmic spiral arm models.

Reid et al. (2009) used the newly measured trigonometric parallaxes of masers to estimate the solar parameters, and concluded that R_0 = 8.4 ± 0.6 kpc and Θ_0 = 254 ± 16 km s^{−1}. They offer a revised prescription (and a Fortran code) to calculate kinematic distances and their uncertainties (see Reid et al. 2009, for details). Using the code they kindly provided to us, we determined the kinematic distances and re-scaled other parameters of our HII regions and GMC samples. Their distribution and the best-fitted polynomial logarithmic-arm model is shown in Fig. 10. Compared with the distribution with R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}, the tracers are nearer to our sun in the second and third Galactic quadrants, so that arms in this region are wound more tightly. The local arm becomes clearer, but the separation between the Perseus arm and Perseus+1 becomes less clear. The grand design of spiral arms in the other parts of the Galaxy looks very similar to that of 8.0/220.

4. Conclusions and remarks

We collected the spiral tracer data of HII regions and giant molecular clouds (GMCs) published in the literature, and used them to study the weighted distribution of these tracers for the overall design of spiral arms of our Milky Way Galaxy. The mass of the GMC and the excitation parameter of an HII region are scaled as the weighting factors. The distances of tracers, if not available from stellar or triangulation measurements, were estimated kinetically using the rotation curve of BB93 with solar constants of R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1}. We fitted the distribution of these tracers with two, three, and four logarithmic spiral arm models. None of the models can match all the main arm features observed. We finally fit the tracer data by using a polynomial logarithmic arm model, which not only can fit the distribution of tracers for the main spiral arms, but also match the tangential directions with the observations. The polynomial

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 9

Fig. 9. The best-fitting polynomial logarithmic-arm model for R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1}, plotted on the data distribution (top panel) and the color brightened-tracer image (bottom panel) of tracers.

model appears to be better able to describe the spiral arms of our Galaxy. When the kinematic distances are estimated by using rotation curves with two sets of parameters, R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1} and R_0 = 8.4 kpc and Θ_0 = 254 km s^{−1}, the distribution of HII regions and GMCs are slightly better fitted by the models, though the parameters do not change significantly.

For most of tracers in our work, we use their kinematic distances derived from the rotation curves. Gómez (2006) found that the error bars are significantly large for objects at the positions of spiral arms. This pitfall cannot be overcome until accurate distances of a large sample of HII regions are measured, e.g. by triangulation of radio masers (e.g. Xu et al. 2006; Reid et al. 2009). A large project is being carried out with the VLBA to directly measure distances of a large sample of massive star formation regions by trigonometric parallaxes (see Reid et al. 2008) with accuracies approaching ∼ 10μas. Published results of several examples show systematically smaller distances than the kinematic distances. They will probably obtain hundreds of mea-

Fig. 10. The same as Fig. 9 but with the rotation curve from Reid et al. (2009) with R_0 = 8.4 kpc and Θ_0 = 254 km s^{−1}.

surements over 10 years for the brightest HII regions covering all the Galactic disk, and the final grand design of our Milky Way will be greatly improved. However, at present, the picture shown in Fig. 10 is the best approximate description of Galactic spiral structure.

Acknowledgements. We thank the referee for instructive comments, and Dr. Mark Reid for providing the Fortran code for the estimation of kinematic distances using their newly determined rotation curves. The authors are supported by the National Natural Science Foundation (NNSF) of China (10773016, 10821061 and 10833003) and the National Key Basic Research Science Foundation of China (2007CB815403).

References

Anderson, L. D. & Bania, T. M. 2009, ApJ, 690, 706 Araya, E., Hofner, P., Churchwell, E., & Kurtz, S. 2002, ApJS, 138, 63 Blum, R. D., Damineli, A., & Conti, P. S. 2001, AJ, 121, 3149 Brand, J. & Blitz, L. 1993, A&A, 275, 67 Brand, J. & Wouterloot, J. G. A. 1994, A&AS, 103, 503 Bronfman, L. 1992, in: Astrophysics and Space Science Library, Vol. 180, The center, bulge, and disk of the Milky Way, ed. L. Blitz, p.131

10 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Brunthaler, A., Reid, M. J., Menten, K. M., et al. 2008, ApJ, submitted (ArXiv 0811.0713) Carpenter, J. M., Snell, R. L., & Schloerb, F. P. 1990, ApJ, 362, 147 Caswell, J. L. & Haynes, R. F. 1987, A&A, 171, 261 Clemens, D. P. 1985, ApJ, 295, 422 Cohen, R. S., Dame, T. M., & Thaddeus, P. 1986, ApJS, 60, 695 Condon, J. J., Cotton, W. D., Greisen, E. W., et al. 1998, AJ, 115, 1693 Copetti, M. V. F., Oliveira, V. A., Riffel, R., Castañeda, H. O., & Sanmartim, D.

2007, A&A, 472, 847 Crowther, P. A. & Furness, J. P. 2008, A&A, 492, 111 Dame, T. M., Elmegreen, B. G., Cohen, R. S., & Thaddeus, P. 1986, ApJ, 305, 892 Dame, T. M., Hartmann, D., & Thaddeus, P. 2001, ApJ, 547, 792 Dawson, J. R., Kawamura, A., Mizuno, N., Onishi, T., & Fukui, Y. 2008, PASJ, 60, 1297 Digel, S., de Geus, E., & Thaddeus, P. 1994, ApJ, 422, 92 Digel, S., Thaddeus, P., & Bally, J. 1990, ApJ, 357, L29 Digel, S. W., Lyder, D. A., Philbrick, A. J., Puche, D., & Thaddeus, P. 1996, ApJ, 458, 561 Downes, D., Wilson, T. L., Bieging, J., & Wink, J. 1980, A&AS, 40, 379 Eisenhauer, F., Schödel, R., Genzel, R., et al. 2003, ApJ, 597, L121 Englmaier, P. & Gerhard, O. 1999, MNRAS, 304, 512 Fich, M., Blitz, L., & Stark, A. A. 1989, ApJ, 342, 272 Fish, V. L., Reid, M. J., Wilner, D. J., & Churchwell, E. 2003, ApJ, 587, 701 Georgelin, Y. M. & Georgelin, Y. P. 1976, A&A, 49, 57 Ghez, A. M., Salim, S., Weinberg, N. N., et al. 2008, ApJ, 689, 1044 Gillessen, S., Eisenhauer, F., Trippe, S., et al. 2009, ApJ, 692, 1075 Gómez, G. C. 2006, AJ, 132, 2376 Grabelsky, D. A., Cohen, R. S., Bronfman, L., & Thaddeus, P. 1988, ApJ, 331, 181 Gregory, P. C., Scott, W. K., Douglas, K., & Condon, J. J. 1996, ApJS, 103, 427 Griffith, M. R., Wright, A. E., Burke, B. F., & Ekers, R. D. 1994, ApJS, 90, 179 Griffith, M. R., Wright, A. E., Burke, B. F., & Ekers, R. D. 1995, ApJS, 97, 347 Groenewegen, M. A. T., Udalski, A., & Bono, G. 2008, A&A, 481, 441 Heyer, M. H., Carpenter, J. M., & Snell, R. L. 2001, ApJ, 551, 852 Kolpak, M. A., Jackson, J. M., Bania, T. M., Clemens, D. P., & Dickey, J. M.

2003, ApJ, 582, 756 Kuchar, T. A. & Bania, T. M. 1994, ApJ, 436, 117 Leahy, D. A. & Tian, W. W. 2008, AJ, 135, 167 Levine, E. S., Blitz, L., & Heiles, C. 2006, Science, 312, 1773 May, J., Alvarez, H., & Bronfman, L. 1997, A&A, 327, 325 Mead, K. N. & Kutner, M. L. 1988, ApJ, 330, 399 Moscadelli, L., Reid, M. J., Menten, K. M., et al. 2008, ApJ, submitted (ArXiv 0811.0679) Nakagawa, M., Onishi, T., Mizuno, A., & Fukui, Y. 2005, PASJ, 57, 917 Naoz, S. & Shaviv, N. J. 2007, New Astronomy, 12, 410 Paladini, R., Burigana, C., Davies, R. D., et al. 2003, A&A, 397, 213 Paladini, R., Davies, R. D., & DeZotti, G. 2004, MNRAS, 347, 237 Pandian, J. D., Momjian, E., & Goldsmith, P. F. 2008, A&A, 486, 191 Puerari, I. & Dottori, H. A. 1992, A&AS, 93, 469 Reid, M. J. 1993, ARA&A, 31, 345 Reid, M. J., Menten, K. M., Brunthaler, A., et al. 2008, ApJ, submitted (ArXiv 0811.0595) Reid, M. J., Menten, K. M., Zheng, X. W., et al. 2009, ApJ, submitted (ArXiv 0902.3913) Russeil, D. 2003, A&A, 397, 133 Russeil, D., Adami, C., & Georgelin, Y. M. 2007, A&A, 470, 161 Schraml, J. & Mezger, P. G. 1969, ApJ, 156, 269 Seigar, M. S. & James, P. A. 1998, MNRAS, 299, 685 Sewilo, M., Watson, C., Araya, E., et al. 2004, ApJS, 154, 553 Sodroski, T. J. 1991, ApJ, 366, 95 Solomon, P. M., Rivolo, A. R., Barrett, J., & Yahil, A. 1987, ApJ, 319, 730 Tian, W. W. & Leahy, D. A. 2008, ApJ, 677, 292 Tian, W. W., Leahy, D. A., Haverkorn, M., & Jiang, B. 2008, ApJ, 679, L85 Tian, W. W., Li, Z., Leahy, D. A., & Wang, Q. D. 2007, ApJ, 657, L25 Vallée, J. P. 2008, AJ, 135, 1301 Watson, C., Araya, E., Sewilo, M., et al. 2003, ApJ, 587, 714 Wright, A. E., Griffith, M. R., Burke, B. F., & Ekers, R. D. 1994, ApJS, 91, 111 Wright, A. E., Griffith, M. R., Hunt, A. J., et al. 1996, ApJS, 103, 145 Xu, Y., Reid, M. J., Menten, K. M., et al. 2008, ApJ, submitted (ArXiv 0811.0701) Xu, Y., Reid, M. J., Zheng, X. W., & Menten, K. M. 2006, Science, 311, 54 Zhang, B., Zheng, X. W., Reid, M. J., et al. 2008, ApJ, submitted (ArXiv 0811.0704)

Appendix A: Tracer data for spiral structure: (online version only)

We collected and calculated the related parameters of HII regions and giant molecular clouds (GMCs) based on the observations in the literature, and present them here in two tables.

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 11

Table A.1. HII regions as tracers of spiral arms. Columns 1 to 3 list the Galactic longitude, Galactic latitude and velocity, taken from the reference given in Column 4; Column 5 to 7 give the radio continuum flux of the HII region, observation frequency and the reference. Column 8 to 10 give the stellar distance when available, as well as the error and the reference; Column 11 is a note for the distance ambiguity and Column 11 is its reference: Knear–the nearer kinematic distance is adopted; Kfar–the farther kinematic distance is adopted; Ktan–the tracer is located at the tangential point and the distance to the tangent is adopted; Kout–the object is in the outer Galaxy and only one kinematic distance is available and adopted; Column 13 and 14 give the kinematic distance to the Sun and distance to the Galactic Center estimated with a rotation curve with R_0 = 8.5 kpc, Θ_0 = 220 km s^{−1}; Column 15 contains the excitation parameter rescaled by the distance we adopted; Column 16 to 18 are the same as Column 13-15 but with constants R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1} for kinematic distances. Column 19 to 21 are the same as Column 13-15 but with constants R_0 = 8.4 kpc and Θ_0 = 254 km s^{−1} for kinematic distances. References: ab09: Anderson & Bania (2009); ahck02: Araya et al. (2002); bdc01: Blum et al. (2001); brm+08: Brunthaler et al. (2008); ccg+98: Condon et al. (1998); cf08: Crowther & Furness (2008); cor+07: Copetti et al. (2007); ch87: Caswell & Haynes (1987); gg76: Georgelin & Georgelin (1976); GB6: Gregory et al. (1996); hh09: This work; kjb+03: Kolpak et al. (2003); kb94: Kuchar & Bania (1994); lt08: Leahy & Tian (2008); mrm+08: Moscadelli et al. (2008); pbd+03: Paladini et al. (2003); pdd04: Paladini et al. (2004); pmg08: Pandian et al. (2008); rus03: Russeil (2003); rag07: Russeil et al. (2007); rmb+08: Reid et al. (2008); swa+04: Sewilo et al. (2004); tlhj08: Tian et al. (2008); was+03: Watson et al. (2003); PMN: Wright et al. (1994, 1996); Griffith et al. (1994, 1995); xrm+08: Xu et al. (2008); zzr+08: Zhang et al. (2008).

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (^o) (^o) km/s Jy GHz kpc kpc kpc kpc pc cm^{−2} kpc kpc pc cm^{−2} kpc kpc pc cm^{−2} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 2.40 1.40 3.0 pbd+03 3.00 2.70 pbd+03 4.7 1.4 rus03 54.7 54.7 54.7 2.90 -0.00 -1.7 pbd+03 3.40 2.70 pbd+03 kout hh09 18.7 10.3 143.3 17.4 9.4 136.6 18.2 9.7 140.7 4.30 0.60 6.6 rus03 1.3 0.4 rus03 28.0 28.0 28.0 6.00 -1.30 2.8 pbd+03 44.90 2.70 pbd+03 1.6 0.25 rus03 65.8 65.8 65.8 6.00 -1.20 3.6 pbd+03 113.40 2.70 pbd+03 1.6 0.25 rus03 89.5 89.5 89.5 6.20 -1.20 3.0 pbd+03 2.10 2.70 pbd+03 1.6 0.25 rus03 23.7 23.7 23.7 6.40 -0.50 19.0 pbd+03 4.00 2.70 pbd+03 knear pdd04 3.8 4.8 52.3 3.5 4.5 49.5 3.6 5.0 50.4 6.50 0.10 14.1 pbd+03 0.50 2.70 pbd+03 knear pdd04 3.1 5.4 22.8 2.9 5.1 21.8 2.9 5.6 21.8 6.60 -0.30 16.1 pbd+03 54.00 2.70 pbd+03 knear pdd04 3.4 5.2 115.6 3.1 4.9 108.7 3.2 5.4 111.0 6.60 -0.10 13.4 pbd+03 11.10 2.70 pbd+03 knear pdd04 3.0 5.5 62.7 2.8 5.2 59.9 2.8 5.7 59.9 6.70 -0.20 19.4 pbd+03 7.60 2.70 pbd+03 knear pdd04 3.7 4.8 63.6 3.5 4.6 61.3 3.5 5.0 61.3 6.90 -2.10 5.4 pbd+03 15.40 2.70 pbd+03 1.6 0.25 rus03 46.0 46.0 46.0 7.00 -0.20 14.3 pbd+03 15.00 2.70 pbd+03 2.7 0.8 rus03 knear pdd04 3.0 5.5 64.7 64.7 64.7 7.30 -0.10 17.9 pbd+03 1.70 2.70 pbd+03 2.7 0.8 rus03 31.3 31.3 31.3 8.40 -0.30 37.9 pbd+03 2.60 2.70 pbd+03 knear pdd04 4.8 3.8 52.9 4.4 3.7 49.9 4.5 4.1 50.7 8.70 -0.40 41.8 pbd+03 1.80 2.70 pbd+03 knear pdd04 4.9 3.7 47.5 4.6 3.5 45.5 4.7 4.0 46.2 8.70 -0.50 15.0 rus03 1.7 0.5 rus03 10.16 -0.35 12.5 swa+04 25.50 4.86 swa+04 kfar swa+04 14.6 6.4 242.5 13.8 6.1 233.6 14.5 6.3 241.4 10.20 -0.30 13.6 pbd+03 55.90 2.70 pbd+03 kfar gg76 14.5 6.3 307.5 13.6 5.9 294.6 14.4 6.2 306.1 10.31 -0.15 9.4 swa+04 8.70 4.86 swa+04 3.4 0.3 bdc01 knear pmg08 1.6 6.9 64.1 64.1 64.1 10.46 0.03 70.2 swa+04 1.07 4.86 swa+04 kfar swa+04 10.9 3.0 69.3 10.4 2.9 67.2 11.1 3.1 70.1 10.60 -0.40 0.2 pbd+03 10.50 2.70 pbd+03 kout hh09 16.8 8.6 194.2 16.3 8.1 190.3 10.70 -0.50 -2.4 pbd+03 2.50 2.70 pbd+03 kout hh09 17.4 9.2 123.2 16.2 8.5 117.5 16.8 8.6 120.4 10.96 0.02 17.7 swa+04 0.98 4.86 swa+04 kfar swa+04 14.1 6.0 79.9 13.3 5.6 76.8 14.0 5.9 79.5 11.11 -0.40 2.1 swa+04 0.69 4.86 swa+04 kfar swa+04 16.4 8.2 78.7 15.3 7.6 75.1 16.0 7.8 77.4 11.50 -1.00 12.0 rus03 3.20 2.70 pbd+03 1.6 0.2 rus03 knear pdd04 2.5 6.0 27.3 27.3 27.3 11.93 -0.61 40.3 swa+04 1.64 4.86 swa+04 knear swa+04 4.2 4.5 42.3 3.9 4.2 40.3 4.0 4.7 40.9 11.99 -0.27 58.2 pmg08 0.07 1.40 ccg+98 kfar pmg08 11.5 3.7 27.8 10.9 3.5 26.8 11.6 3.8 28.0 12.40 -0.00 -18.4 pbd+03 0.80 2.70 pbd+03 kout hh09 22.6 14.4 100.3 20.8 13.1 94.9 20.9 12.7 95.2 12.40 -1.10 41.0 pbd+03 1.00 2.70 pbd+03 knear pdd04 4.2 4.5 35.2 3.9 4.3 33.5 4.0 4.7 34.1 12.41 0.51 34.1 swa+04 0.11 4.86 swa+04 knear swa+04 3.7 4.9 15.8 3.5 4.7 15.2 3.5 5.1 15.2 12.63 -0.02 33.5 swa+04 0.50 4.86 swa+04 kfar swa+04 12.9 5.0 60.2 12.2 4.7 58.0 12.9 5.0 60.2 12.68 -0.18 57.4 pmg08 0.32 1.40 ccg+98 knear pmg08 5.0 3.8 26.5 4.6 3.7 25.1 4.7 4.1 25.4 12.78 0.33 15.8 swa+04 0.37 4.86 swa+04 kfar swa+04 14.5 6.4 58.9 13.6 6.0 56.4 14.3 6.3 58.4 12.80 -0.20 36.0 pbd+03 41.70 2.70 pbd+03 knear gg76 3.8 4.9 114.2 3.6 4.6 110.2 3.6 5.1 110.2 12.80 0.40 20.7 pbd+03 4.10 2.70 pbd+03 2.4 0.2 rus03 38.8 38.8 38.8 12.91 -0.26 31.7 swa+04 1.06 4.86 swa+04 kfar swa+04 13.1 5.1 78.1 12.3 4.9 74.9 13.1 5.1 78.1 13.13 -0.15 40.6 swa+04 0.24 4.86 swa+04 kfar swa+04 12.5 4.7 46.2 11.8 4.4 44.5 12.5 4.7 46.2 13.20 0.00 55.1 pbd+03 7.00 2.70 pbd+03 knear gg76 4.8 4.0 73.6 4.4 3.8 69.5 4.5 4.2 70.5 13.40 0.10 18.3 pbd+03 10.20 2.70 pbd+03 kfar pdd04 14.2 6.3 172.0 13.4 5.9 165.5 14.1 6.2 171.2 13.50 -0.20 11.3 pbd+03 0.60 2.70 pbd+03 1.6 0.25 rus03 15.6 15.6 15.6 13.80 -0.80 23.9 pbd+03 14.20 2.70 pbd+03 1.6 0.25 rus03 44.8 44.8 44.8 13.88 0.28 51.0 swa+04 4.15 4.86 swa+04 knear swa+04 4.5 4.3 60.4 4.2 4.1 57.7 4.2 4.5 57.7 14.00 -0.10 35.7 pbd+03 3.40 2.70 pbd+03 knear pdd04 3.6 5.1 47.8 3.4 4.8 46.0 3.4 5.2 46.0 14.09 0.10 16.3 pmg08 0.11 1.40 ccg+98 kfar pmg08 14.5 6.6 37.7 13.6 6.1 36.1 14.3 6.4 37.4 14.10 -0.50 20.6 pbd+03 1.70 2.70 pbd+03 1.6 0.25 rus03 22.1 22.1 22.1 14.20 -0.20 36.9 pbd+03 28.80 2.70 pbd+03 knear pdd04 3.7 5.0 99.2 3.4 4.8 93.8 3.5 5.2 95.6 14.20 -0.10 36.1 pbd+03 1.90 2.70 pbd+03 knear pdd04 3.6 5.1 39.3 3.4 4.8 37.8 3.4 5.2 37.8 14.33 -0.64 27.6 swa+04 0.39 4.86 swa+04 knear swa+04 3.0 5.6 21.0 2.8 5.3 20.1 2.9 5.8 20.5 14.40 -0.70 11.9 pbd+03 2.90 2.70 pbd+03 1.6 0.25 rus03 knear pdd04 1.5 7.0 26.4 26.4 26.4 14.60 0.00 34.9 pbd+03 40.00 2.70 pbd+03 knear pdd04 3.5 5.2 106.6 3.3 4.9 102.5 3.3 5.4 102.5 14.60 0.10 37.3 pbd+03 32.00 2.70 pbd+03 knear pdd04 3.6 5.0 100.8 3.4 4.8 97.0 3.5 5.2 98.9 14.68 -0.50 27.5 swa+04 0.49 4.86 swa+04 kfar swa+04 13.5 5.7 61.6 12.7 5.4 59.1 13.4 5.6 61.3 15.00 -0.70 13.9 pbd+03 489.00 2.70 pbd+03 1.6 0.25 rus03 knear pdd04 1.7 6.9 145.7 145.7 145.7 15.10 -0.90 13.8 pbd+03 4.20 2.70 pbd+03 1.6 0.25 rus03 knear pdd04 1.7 6.9 29.8 29.8 29.8 15.10 -0.70 19.1 pbd+03 552.00 2.70 pbd+03 1.6 0.25 rus03 knear pdd04 2.2 6.4 151.8 151.8 151.8 15.20 -0.60 13.9 pbd+03 5.60 2.70 pbd+03 1.6 0.25 rus03 knear pdd04 1.7 6.9 32.9 32.9 32.9 15.20 -0.80 23.7 pbd+03 7.10 2.70 pbd+03 1.6 0.25 rus03 knear pdd04 2.6 6.0 35.6 35.6 35.6 15.20 1.50 17.5 rus03 2.8 0.6 rus03 50.0 50.0 50.0 15.64 -0.24 61.8 ab09 0.52 4.85 PMN kfar ab09 11.6 4.1 56.8 11.0 3.9 54.8 11.7 4.2 57.1 16.30 -0.20 49.5 pbd+03 14.00 2.70 pbd+03 4.0 0.6 rus03 knear ab09 4.1 4.7 82.1 82.1 82.1 16.40 -0.50 42.7 pbd+03 8.10 2.70 pbd+03 4.0 0.6 rus03 68.4 68.4 68.4 16.40 -0.20 44.5 pbd+03 6.00 2.70 pbd+03 4.0 0.6 rus03 knear ab09 3.9 4.9 61.9 61.9 61.9 16.58 -0.05 34.7 swa+04 0.28 4.86 swa+04 kfar swa+04 13.0 5.5 49.9 12.3 5.2 48.1 13.0 5.4 49.9

12 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 16.60 -0.30 44.9 pbd+03 2.30 2.70 pbd+03 4.0 0.6 rus03 45.0 45.0 45.0 16.90 -1.10 pbd+03 1.30 2.70 pbd+03 1.6 0.25 rus03 20.2 20.2 20.2 16.90 0.80 26.3 pbd+03 169.00 2.70 pbd+03 2.0 0.25 rus03 knear pdd04 2.6 6.0 118.7 118.7 118.7 17.00 0.80 24.5 pbd+03 107.00 2.70 pbd+03 2.0 0.25 rus03 knear pdd04 2.5 6.2 101.9 101.9 101.9 17.00 0.90 26.4 pbd+03 21.10 2.70 pbd+03 2.0 0.25 rus03 knear pdd04 2.6 6.0 59.3 59.3 59.3 17.10 0.80 27.4 pbd+03 8.80 2.70 pbd+03 2.0 0.25 rus03 44.3 44.3 44.3 17.64 0.15 25.2 swa+04 0.29 4.86 swa+04 kfar swa+04 13.7 6.2 52.3 12.9 5.8 50.2 13.6 6.1 52.0 18.10 -0.30 53.8 pbd+03 5.80 2.70 pbd+03 knear pdd04 4.2 4.7 63.2 3.9 4.5 60.2 3.9 4.9 60.2 18.20 -0.18 46.1 ab09 2.60 2.70 pbd+03 kfar ab09 12.4 5.1 99.6 11.7 4.8 95.8 12.4 5.1 99.6 18.20 -0.40 43.3 pbd+03 3.10 2.70 pbd+03 knear pdd04 3.6 5.2 46.3 3.4 4.9 44.6 3.4 5.4 44.6 18.20 -0.30 47.0 pbd+03 27.00 2.70 pbd+03 knear pdd04 3.8 5.0 98.8 3.6 4.8 95.3 3.6 5.2 95.3 18.30 -0.40 30.5 pbd+03 1.70 2.70 pbd+03 knear pdd04 2.8 5.9 32.1 2.6 5.6 30.6 2.7 6.0 31.3 18.30 -0.30 50.7 pbd+03 5.40 2.70 pbd+03 knear pdd04 4.0 4.9 59.8 3.7 4.6 56.8 3.8 5.1 57.8 18.30 1.90 29.9 pbd+03 5.90 2.70 pbd+03 2.0 0.2 rus03 knear pdd04 2.8 5.9 38.8 38.8 38.8 18.46 -0.00 56.5 swa+04 0.77 4.86 swa+04 kfar swa+04 11.9 4.7 65.9 11.2 4.4 63.3 11.9 4.7 65.9 18.60 -0.30 71.1 pbd+03 2.40 2.70 pbd+03 3.4 1.0 rus03 40.9 40.9 40.9 18.66 -0.06 44.1 swa+04 0.43 4.86 swa+04 kfar swa+04 12.5 5.2 56.1 11.8 4.9 54.0 12.5 5.2 56.1 18.70 2.00 26.6 pbd+03 88.00 2.70 pbd+03 2.0 0.2 rus03 knear pdd04 2.5 6.2 95.5 95.5 95.5 18.90 -0.50 65.5 pbd+03 15.70 2.70 pbd+03 3.4 1.0 rus03 knear pdd04 4.6 4.4 76.6 76.6 76.6 18.90 -0.40 68.0 pbd+03 18.50 2.70 pbd+03 3.4 1.0 rus03 knear pdd04 4.7 4.3 80.9 80.9 80.9 18.95 -0.02 52.3 ab09 2.16 4.85 PMN 3.4 1.0 rus03 knear ab09 4.0 4.9 40.3 40.3 40.3 19.00 -0.00 48.7 pbd+03 2.60 2.70 pbd+03 3.4 1.0 rus03 knear pdd04 3.8 5.0 42.0 42.0 42.0 19.00 -0.40 65.8 pbd+03 7.10 2.70 pbd+03 3.4 1.0 rus03 knear ab09 4.6 4.4 58.8 58.8 58.8 19.00 -0.60 68.2 pbd+03 2.00 2.70 pbd+03 3.4 1.0 rus03 knear ab09 4.7 4.3 38.5 38.5 38.5 19.07 -0.28 64.2 swa+04 3.40 4.86 swa+04 3.4 1.0 rus03 knear swa+04 4.6 4.4 46.9 46.9 46.9 19.10 -0.30 66.5 pbd+03 25.00 2.70 pbd+03 3.4 1.0 rus03 knear pdd04 4.7 4.4 89.4 89.4 89.4 19.12 -0.34 63.5 swa+04 1.35 4.86 swa+04 3.4 1.0 rus03 knear swa+04 4.5 4.5 34.5 34.5 34.5 19.36 -0.02 51.1 swa+04 0.33 4.86 swa+04 kfar swa+04 12.1 5.0 50.2 11.4 4.7 48.2 12.1 5.0 50.2 19.50 0.10 19.9 pbd+03 3.50 2.70 pbd+03 2.0 0.2 rus03 32.6 32.6 32.6 19.60 -0.90 38.7 swa+04 0.37 4.86 swa+04 kfar swa+04 12.8 5.6 54.2 12.0 5.3 51.9 12.8 5.5 54.2 19.61 -0.13 58.6 ab09 4.20 2.70 pbd+03 kfar ab09 11.7 4.7 112.4 11.1 4.5 108.5 11.8 4.7 113.0 19.61 -0.23 41.0 kjb+03 13.00 2.70 pbd+03 kfar kjb+03 12.7 5.4 173.1 11.9 5.1 165.8 12.6 5.4 172.2 19.68 -0.13 55.0 kjb+03 2.60 2.70 pbd+03 kfar kjb+03 11.9 4.8 96.9 11.3 4.6 93.6 12.0 4.9 97.4 19.70 -0.20 43.4 pbd+03 13.00 2.70 pbd+03 knear gg76 3.5 5.3 73.3 3.3 5.0 70.5 3.3 5.5 70.5 19.88 -0.53 50.9 swa+04 0.26 4.86 swa+04 kfar swa+04 12.1 5.0 46.4 11.4 4.8 44.6 12.1 5.0 46.4 20.08 -0.14 42.2 ab09 1.60 2.70 pbd+03 kfar ab09 12.6 5.4 85.6 11.9 5.1 82.4 12.6 5.4 85.6 20.50 0.20 24.1 pbd+03 2.40 2.70 pbd+03 2.0 0.2 rus03 28.7 28.7 28.7 20.73 -0.09 56.3 ab09 7.76 4.85 GB6 kfar ab09 11.8 4.9 141.5 11.2 4.6 136.7 11.9 4.9 142.3 21.00 0.10 18.6 pbd+03 1.20 2.70 pbd+03 kfar pdd04 14.2 6.9 84.3 13.3 6.5 80.7 13.9 6.7 83.1 21.14 -0.30 38.5 ab09 0.49 4.85 PMN kfar ab09 12.8 5.7 59.5 12.0 5.4 57.0 12.7 5.7 59.2 21.44 -0.56 70.2 swa+04 0.34 4.86 swa+04 knear swa+04 4.7 4.5 27.0 4.3 4.3 25.4 4.4 4.7 25.8 21.67 -0.26 70.1 ab09 0.31 4.85 PMN knear ab09 4.7 4.5 26.2 4.3 4.3 24.7 4.4 4.7 25.1 21.87 0.01 26.9 swa+04 1.18 4.86 swa+04 kfar swa+04 13.5 6.4 82.6 12.7 6.0 79.3 13.3 6.3 81.8 21.90 -0.37 79.5 ab09 3.00 2.70 pbd+03 kfar ab09 10.7 4.3 94.7 10.2 4.1 91.7 10.9 4.4 95.9 22.36 0.06 82.5 swa+04 0.50 4.86 swa+04 knear swa+04 5.1 4.2 32.4 4.8 4.0 31.1 4.8 4.5 31.1 22.76 -0.49 74.8 ab09 2.70 2.70 pbd+03 knear ab09 4.8 4.5 53.6 4.4 4.3 50.6 4.5 4.7 51.3 22.80 -0.30 82.5 pbd+03 52.30 2.70 pbd+03 kfar gg76 10.5 4.3 242.5 10.0 4.1 234.7 10.7 4.4 245.6 22.90 -0.30 71.1 pbd+03 2.40 2.70 pbd+03 kfar pdd04 11.0 4.6 89.6 10.4 4.4 86.3 11.1 4.7 90.1 22.90 0.70 99.0 pbd+03 0.60 2.70 pbd+03 knear pdd04 5.8 3.9 36.8 5.3 3.7 34.7 5.4 4.1 35.1 23.00 -0.40 74.1 pbd+03 4.10 2.70 pbd+03 4.59 0.4 brm+08 59.0 59.0 59.0 23.00 0.22 97.9 ab09 0.28 4.85 PMN kfar ab09 9.9 3.9 41.6 9.4 3.7 40.2 10.1 4.0 42.2 23.10 0.60 29.5 pbd+03 2.80 2.70 pbd+03 1.7 0.5 rus03 knear pdd04 2.4 6.4 27.1 27.1 27.1 23.10 -0.20 89.6 pbd+03 2.10 2.70 pbd+03 kfar lt08 10.2 4.1 81.4 9.7 3.9 78.7 10.4 4.2 82.5 23.10 -0.40 82.7 pbd+03 3.20 2.70 pbd+03 knear lt08 5.1 4.3 59.0 4.7 4.1 55.9 4.8 4.5 56.7 23.24 -0.24 76.1 ab09 1.54 4.86 swa+04 knear ab09 4.8 4.5 45.3 4.5 4.3 43.4 4.5 4.7 43.4 23.27 0.08 78.2 ab09 0.49 4.86 swa+04 knear ab09 4.9 4.4 31.4 4.6 4.2 30.1 4.6 4.6 30.1 23.28 0.30 108.8 ab09 0.20 2.70 pbd+03 knear ab09 6.2 3.7 26.7 5.7 3.6 25.2 5.7 4.0 25.2 23.42 -0.21 103.0 lt08 19.30 2.70 pbd+03 5.88 1.2 brm+08 kfar lt08 9.6 3.8 117.1 117.1 117.1 23.46 -0.20 99.0 ab09 7.89 4.85 PMN knear ab09 5.8 3.9 88.6 5.3 3.8 83.4 5.4 4.2 84.5 23.50 -0.00 91.3 pbd+03 9.50 2.70 pbd+03 kfar pdd04 10.1 4.1 133.8 9.6 3.9 129.3 10.3 4.2 135.6 23.61 -0.38 90.1 ab09 1.60 2.70 pbd+03 knear ab09 5.4 4.2 48.7 5.0 4.0 46.3 5.0 4.4 46.3 23.71 0.17 103.8 ab09 2.60 2.70 pbd+03 knear ab09 6.0 3.8 61.4 5.5 3.7 57.9 5.5 4.1 57.9 23.71 -0.20 76.5 swa+04 0.77 4.86 swa+04 kfar swa+04 10.7 4.5 61.4 10.2 4.3 59.5 10.9 4.6 62.2 23.82 0.22 107.4 ab09 0.80 2.70 pbd+03 kfar ab09 9.4 3.8 55.9 9.0 3.6 54.3 9.7 3.9 57.1 23.90 -0.10 73.8 pbd+03 1.10 2.70 pbd+03 kfar pdd04 10.8 4.6 68.2 10.3 4.4 66.1 10.9 4.7 68.6 23.96 0.15 78.9 ab09 2.70 2.70 pbd+03 2.5 0.4 cf08 knear ab09 4.9 4.5 34.7 34.7 34.7 24.13 -0.07 86.9 ab09 0.40 2.70 pbd+03 kfar ab09 10.2 4.3 46.9 9.7 4.1 45.4 10.4 4.4 47.5 24.14 0.12 114.5 ab09 0.50 2.70 pbd+03 kfar ab09 8.9 3.7 46.1 8.6 3.5 45.1 9.4 3.8 47.8 24.19 0.20 111.9 ab09 0.60 2.70 pbd+03 kfar ab09 9.1 3.7 49.7 8.7 3.6 48.2 9.5 3.9 51.1 24.20 -0.10 83.6 pbd+03 0.80 2.70 pbd+03 kfar pdd04 10.4 4.4 59.8 9.8 4.2 57.5 10.5 4.5 60.2 24.39 0.07 110.0 ab09 2.80 2.70 pbd+03 kfar ab09 9.1 3.8 83.1 8.8 3.6 81.3 9.5 3.9 85.5 24.47 0.49 99.8 ab09 13.00 2.70 pbd+03 knear ab09 5.8 4.0 102.6 5.4 3.8 97.8 5.4 4.2 97.8 24.48 0.21 115.7 ab09 18.00 2.70 pbd+03 kfar ab09 8.8 3.7 151.1 8.5 3.5 147.6 9.3 3.8 156.8 24.50 -0.04 108.1 ab09 0.90 4.86 swa+04 kfar ab09 9.2 3.8 58.5 8.8 3.7 56.8 9.6 4.0 60.2 24.51 -0.22 44.3 ab09 4.19 4.85 PMN knear ab09 3.2 5.7 48.3 3.0 5.4 46.3 3.1 5.8 47.3 24.51 -0.22 96.4 ab09 19.00 2.70 pbd+03 kfar ab09 9.8 4.1 165.2 9.3 3.9 159.5 10.0 4.2 167.4 24.68 -0.16 44.0 ab09 4.91 4.85 PMN knear ab09 3.2 5.7 50.9 3.0 5.4 48.8 3.1 5.9 49.8 24.68 -0.16 111.1 ab09 9.90 2.70 pbd+03 kfar ab09 9.0 3.8 125.6 8.7 3.6 122.8 9.4 3.9 129.3 24.70 -0.10 101.1 pbd+03 23.40 2.70 pbd+03 knear pdd04 5.9 4.0 126.3 5.4 3.8 119.1 5.4 4.2 119.1 24.70 -0.20 84.8 pbd+03 3.20 2.70 pbd+03 2.2 0.25 rus03 33.7 33.7 33.7 24.81 0.10 108.6 ab09 13.30 2.70 pbd+03 knear ab09 6.3 3.8 109.3 5.8 3.7 103.4 5.7 4.1 102.2 25.16 0.06 47.0 ab09 0.80 2.70 pbd+03 knear ab09 3.4 5.7 28.4 3.1 5.3 26.7 3.2 5.8 27.3 25.26 -0.32 63.7 ab09 2.00 2.70 pbd+03 kfar ab09 11.2 5.0 85.3 10.6 4.8 82.2 11.2 5.1 85.3

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 13

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 25.30 0.30 40.3 pbd+03 2.30 2.70 pbd+03 2.2 0.25 rus03 30.2 30.2 30.2 25.40 -0.14 98.4 ab09 16.19 4.85 PMN knear ab09 5.8 4.1 112.6 5.3 3.9 106.0 5.3 4.3 106.0 25.40 -0.30 62.5 pbd+03 1.60 2.70 pbd+03 kfar pdd04 11.2 5.1 79.2 10.6 4.8 76.3 11.3 5.1 79.7 25.40 -0.20 59.1 pbd+03 26.00 2.70 pbd+03 kfar pdd04 11.4 5.2 202.9 10.8 4.9 195.7 11.4 5.2 202.9 25.40 0.00 -13.7 pbd+03 1.40 2.70 pbd+03 kout hh09 17.2 10.2 100.8 15.9 9.4 95.7 16.4 9.4 97.6 25.70 0.00 56.3 pbd+03 2.60 2.70 pbd+03 kfar pdd04 11.5 5.3 94.7 10.9 5.0 91.4 11.5 5.3 94.7 25.77 0.21 110.8 ab09 2.28 4.86 swa+04 knear ab09 6.5 3.9 63.2 5.9 3.7 59.2 5.9 4.1 59.2 25.79 -0.14 119.5 swa+04 0.42 4.86 swa+04 ktan swa+04 7.7 3.7 40.3 25.80 0.24 119.5 ab09 5.01 4.85 PMN knear ab09 7.3 3.7 88.8 6.4 3.6 81.3 6.3 3.9 80.5 26.10 -0.10 76.9 pbd+03 8.90 2.70 pbd+03 kfar pdd04 10.5 4.7 134.4 9.9 4.5 129.2 10.6 4.8 135.3 26.40 1.80 43.0 pbd+03 0.20 2.70 pbd+03 2.3 0.7 rus03 13.8 13.8 13.8 26.54 0.41 88.4 kjb+03 3.20 2.70 pbd+03 kfar kjb+03 9.9 4.4 91.9 9.4 4.2 88.8 10.1 4.5 93.1 26.56 -0.31 104.2 ab09 2.30 2.70 pbd+03 kfar ab09 9.1 4.1 77.8 8.7 3.9 75.5 9.4 4.2 79.5 26.60 0.09 102.5 ab09 1.18 4.85 PMN kfar ab09 9.1 4.1 63.5 8.8 3.9 62.1 9.5 4.2 65.3 26.60 -0.11 69.2 ab09 5.70 2.70 pbd+03 kfar ab09 10.8 5.0 118.0 10.2 4.7 113.6 10.9 5.0 118.7 26.98 -0.07 79.9 ab09 1.10 2.70 pbd+03 kfar ab09 10.2 4.7 65.7 9.7 4.4 63.5 10.4 4.8 66.6 27.30 0.10 36.3 pbd+03 1.40 2.70 pbd+03 kfar pdd04 12.5 6.3 81.5 11.7 5.9 78.0 12.4 6.2 81.1 27.31 -0.14 92.3 ab09 8.50 2.70 pbd+03 knear ab09 5.5 4.4 86.0 5.1 4.2 81.8 5.1 4.6 81.8 27.50 0.20 33.9 pbd+03 3.00 2.70 pbd+03 kfar pdd04 12.6 6.4 105.6 11.8 6.0 101.1 12.5 6.3 105.0 27.98 0.08 76.6 swa+04 0.33 4.86 swa+04 kfar swa+04 10.3 4.8 45.1 9.7 4.6 43.3 10.4 4.9 45.4 28.00 0.32 92.7 ab09 0.39 4.85 PMN kfar ab09 9.4 4.4 44.9 9.0 4.2 43.6 9.7 4.6 45.9 28.00 -0.03 99.9 ab09 1.00 2.70 pbd+03 kfar ab09 9.0 4.3 58.5 8.6 4.1 56.8 9.4 4.4 60.2 28.15 0.15 89.2 ab09 0.26 4.85 PMN knear ab09 5.4 4.5 27.1 5.0 4.3 25.7 5.0 4.7 25.7 28.25 0.01 110.3 ab09 0.33 4.85 PMN kfar ab09 8.1 4.1 38.4 7.9 3.9 37.8 8.8 4.2 40.6 28.30 -0.38 44.8 pmg08 0.37 1.40 ccg+98 kfar pmg08 11.9 5.9 49.5 11.2 5.6 47.5 11.8 5.9 49.2 28.30 -0.38 75.6 pmg08 0.70 1.40 ccg+98 kfar pmg08 10.3 4.9 55.6 9.7 4.6 53.4 10.4 5.0 56.0 28.44 0.00 96.9 ab09 0.90 2.70 pbd+03 knear ab09 5.8 4.4 42.1 5.4 4.2 40.1 5.3 4.6 39.6 28.60 0.00 96.7 pbd+03 14.30 2.70 pbd+03 kfar pdd04 9.1 4.4 143.1 8.7 4.2 138.9 9.4 4.5 146.2 28.60 -0.36 89.0 swa+04 0.78 4.86 swa+04 knear swa+04 5.4 4.6 39.1 5.0 4.3 37.1 5.0 4.8 37.1 28.61 0.02 101.7 ab09 4.18 4.85 PMN kfar ab09 8.8 4.3 94.7 8.4 4.1 91.8 9.2 4.4 97.5 28.64 0.19 103.8 ab09 0.80 2.70 pbd+03 ktan ab09 7.5 4.1 48.1 28.70 0.00 102.3 pbd+03 6.80 2.70 pbd+03 kfar pdd04 8.7 4.3 108.4 8.4 4.1 105.9 9.1 4.4 111.7 28.79 0.25 98.8 ab09 1.40 2.70 pbd+03 kfar ab09 8.9 4.3 65.0 8.5 4.1 63.0 9.3 4.5 66.9 28.80 0.17 107.6 ab09 6.00 2.70 pbd+03 kfar ab09 8.2 4.2 99.9 8.0 4.0 98.3 8.8 4.3 104.7 28.80 3.50 0.6 pbd+03 34.00 2.70 pbd+03 kout hh09 15.0 8.6 266.5 14.5 8.2 260.5 28.82 -0.23 90.6 ab09 1.40 2.70 pbd+03 knear ab09 5.5 4.5 47.1 5.1 4.3 44.8 5.1 4.7 44.8 28.86 0.06 101.7 ab09 0.60 4.86 swa+04 kfar ab09 8.7 4.3 49.2 8.4 4.1 48.1 9.1 4.4 50.7 28.90 3.50 1.1 pbd+03 33.40 2.70 pbd+03 kout hh09 14.9 8.5 263.7 14.5 8.1 259.0 29.00 -0.60 52.6 pbd+03 4.00 2.70 pbd+03 3.3 0.7 rus03 47.6 47.6 47.6 29.10 -0.70 47.3 pbd+03 1.20 2.70 pbd+03 3.3 0.7 rus03 knear pdd04 3.2 5.9 31.9 31.9 31.9 29.10 -0.00 52.4 pbd+03 2.10 2.70 pbd+03 3.3 0.7 rus03 38.4 38.4 38.4 29.14 0.43 21.9 ab09 2.70 2.70 pbd+03 kfar ab09 13.2 7.1 105.2 12.4 6.6 100.9 13.0 6.9 104.1 29.20 0.00 61.7 pbd+03 6.60 2.70 pbd+03 3.3 0.7 rus03 56.2 56.2 56.2 29.90 -0.00 97.5 pbd+03 19.00 2.70 pbd+03 kfar pdd04 8.7 4.5 152.6 8.4 4.2 149.1 9.1 4.6 157.2 29.96 -0.02 91.3 swa+04 6.02 4.86 swa+04 kfar swa+04 9.1 4.6 109.3 8.7 4.4 106.1 9.4 4.7 111.7 30.06 -0.33 101.3 ab09 0.11 4.85 PMN knear ab09 6.3 4.4 22.5 5.8 4.2 21.3 5.7 4.6 21.0 30.07 -0.16 98.2 ab09 1.00 2.70 pbd+03 kfar ab09 8.6 4.4 56.8 8.3 4.2 55.5 9.1 4.6 59.0 30.23 -0.15 99.4 ab09 3.50 2.70 pbd+03 knear ab09 6.2 4.4 69.3 5.7 4.2 65.5 5.6 4.6 64.8 30.28 -0.02 97.9 ab09 1.50 2.70 pbd+03 knear ab09 6.1 4.5 51.7 5.6 4.3 48.8 5.5 4.7 48.3 30.38 -0.11 99.8 ab09 0.72 4.86 swa+04 knear ab09 6.3 4.4 42.2 5.7 4.2 39.5 5.6 4.6 39.0 30.40 -0.24 102.5 ab09 8.50 2.70 pbd+03 kfar ab09 8.1 4.4 111.3 7.9 4.2 109.5 8.7 4.5 116.7 30.42 0.46 22.5 swa+04 0.31 4.86 swa+04 kfar swa+04 13.0 7.1 51.6 12.2 6.7 49.5 12.8 6.9 51.1 30.50 -0.29 107.3 ab09 3.20 2.70 pbd+03 kfar ab09 7.8 4.3 78.4 7.3 4.1 75.0 8.4 4.4 82.4 30.50 0.00 49.6 pbd+03 1.50 2.70 pbd+03 knear pdd04 3.3 5.9 34.3 3.1 5.5 32.9 3.2 6.0 33.6 30.50 0.40 57.7 pbd+03 2.20 2.70 pbd+03 knear pdd04 3.8 5.6 42.8 3.5 5.3 40.5 3.6 5.7 41.3 30.54 0.02 46.1 ab09 1.61 4.85 PMN kfar ab09 11.5 6.0 82.3 10.8 5.7 78.9 11.5 6.0 82.3 30.54 -0.45 106.5 ab09 2.00 2.70 pbd+03 kfar ab09 7.7 4.3 66.4 7.4 4.1 64.7 8.4 4.5 70.4 30.60 -0.10 102.5 pbd+03 2.60 2.70 pbd+03 ktan pdd04 7.3 4.3 70.0 30.60 -0.60 17.8 rus03 0.5 0.1 rus03 30.69 -0.26 98.5 ab09 3.20 2.70 pbd+03 kfar ab09 8.4 4.5 82.3 8.1 4.3 80.3 8.9 4.6 85.5 30.80 -0.00 91.8 pbd+03 95.00 2.70 pbd+03 knear pmg08 8.9 4.6 265.0 5.2 4.4 185.2 5.2 4.8 185.2 30.85 0.13 100.0 kb94 1.80 2.70 pbd+03 ktan kb94 7.3 4.4 61.9 31.00 0.00 101.2 pbd+03 37.00 2.70 pbd+03 kfar pdd04 8.0 4.4 180.2 7.8 4.2 177.2 8.6 4.6 189.1 31.05 0.48 27.9 ab09 1.70 2.70 pbd+03 kfar ab09 12.6 6.9 87.4 11.8 6.4 83.7 12.4 6.7 86.5 31.13 0.28 104.7 ab09 1.20 2.70 pbd+03 kfar ab09 7.7 4.4 56.0 7.4 4.2 54.5 8.4 4.5 59.3 31.17 -0.13 41.4 kb94 1.60 2.70 pbd+03 kfar kb94 11.7 6.2 81.5 11.0 5.9 78.2 11.6 6.2 81.0 31.24 -0.11 98.0 kjb+03 3.40 2.70 pbd+03 ktan kjb+03 7.3 4.4 76.5 31.28 0.06 104.7 ab09 0.70 2.70 pbd+03 knear ab09 6.8 4.4 43.1 6.4 4.2 41.4 6.0 4.6 39.6 31.40 -0.26 86.2 ab09 6.00 2.70 pbd+03 kfar ab09 9.1 4.8 107.1 8.7 4.6 103.9 9.4 4.9 109.4 31.41 0.31 100.9 ab09 1.43 4.86 swa+04 knear ab09 6.6 4.5 54.7 6.0 4.3 51.3 5.8 4.7 50.2 31.60 0.10 99.9 pbd+03 0.90 2.70 pbd+03 knear pdd04 6.5 4.5 45.5 5.9 4.3 42.7 5.7 4.7 41.7 31.90 1.40 53.0 rus03 1.80 2.70 pbd+03 3.8 1.1 rus03 knear pdd04 3.6 5.8 40.1 40.1 40.1 32.20 0.10 96.7 pbd+03 0.90 2.70 pbd+03 kfar pdd04 8.1 4.6 52.7 7.8 4.4 51.4 8.6 4.7 54.8 32.80 0.20 15.5 pbd+03 1.70 2.70 pbd+03 kfar pdd04 13.2 7.6 90.1 12.3 7.1 86.0 12.9 7.3 88.7 32.97 0.04 93.2 pmg08 0.16 1.40 ccg+98 kfar pmg08 8.2 4.7 29.2 7.9 4.5 28.5 8.6 4.9 30.1 33.13 -0.09 87.4 ab09 0.50 4.86 ahck02 knear ab09 5.6 4.9 34.5 5.2 4.6 32.8 5.1 5.1 32.4 33.20 -0.01 105.8 ab09 0.29 4.86 was+03 kfar ab09 8.4 4.5 37.7 7.7 4.3 35.6 7.0 4.7 33.4 33.24 0.01 35.1 was+03 0.46 4.86 was+03 kfar was+03 11.8 6.6 55.2 11.1 6.2 53.0 11.6 6.5 54.6 33.40 -0.00 76.5 pbd+03 0.80 2.70 pbd+03 kfar pdd04 9.3 5.2 55.5 8.8 4.9 53.5 9.5 5.3 56.3 33.81 -0.19 40.3 was+03 0.15 4.86 was+03 kfar was+03 11.4 6.4 37.1 10.7 6.0 35.6 11.3 6.3 36.9 33.92 0.11 99.0 ab09 0.83 4.86 ahck02 kfar ab09 7.9 4.7 51.4 7.2 4.4 48.3 7.8 4.8 51.0 34.09 0.44 32.6 ab09 0.18 4.86 was+03 kfar ab09 11.8 6.8 40.4 11.1 6.3 38.8 11.7 6.6 40.2 34.26 0.15 54.0 ahck02 5.57 4.86 ahck02 knear ahck02 3.5 5.9 56.4 3.3 5.6 54.2 3.4 6.0 55.3

14 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 34.30 0.10 54.5 pbd+03 15.00 2.70 pbd+03 knear pdd04 3.6 5.9 78.3 3.4 5.6 75.4 3.4 6.0 75.4 34.40 0.23 60.1 ab09 0.06 4.86 was+03 kfar ab09 10.1 5.7 25.2 9.5 5.4 24.2 10.2 5.7 25.4 34.76 -0.68 52.1 ab09 2.80 2.70 pbd+03 knear ab09 3.4 6.0 43.1 3.2 5.7 41.4 3.3 6.1 42.3 34.93 -0.02 45.6 ab09 1.90 2.70 pbd+03 kfar ab09 10.9 6.3 82.3 10.2 5.9 78.7 10.8 6.2 81.8 35.02 0.35 57.2 ab09 0.04 4.86 was+03 knear ab09 3.7 5.8 11.3 3.5 5.5 10.9 3.6 5.9 11.1 35.04 -0.50 48.0 was+03 0.31 4.86 was+03 kfar was+03 10.7 6.2 45.3 10.1 5.8 43.6 10.7 6.1 45.3 35.10 -1.50 44.2 pbd+03 3.00 2.70 pbd+03 3.27 0.5 zzr+08 knear pdd04 3.0 6.3 42.4 42.4 42.4 35.20 -1.70 46.5 pbd+03 14.80 2.70 pbd+03 3.27 0.5 zzr+08 72.1 72.1 72.1 35.20 -1.80 47.1 pbd+03 19.00 2.70 pbd+03 knear pdd04 3.1 6.2 76.7 3.0 5.8 75.0 3.0 6.3 75.0 35.30 -1.80 46.6 pbd+03 5.10 2.70 pbd+03 knear pdd04 3.1 6.2 49.5 2.9 5.9 47.3 3.0 6.3 48.4 35.57 -0.03 51.8 ahck02 0.47 4.86 ahck02 knear ahck02 3.4 6.1 24.2 3.2 5.7 23.2 3.3 6.1 23.7 35.58 0.07 47.6 ahck02 0.53 4.86 ahck02 knear ahck02 3.2 6.2 24.2 3.0 5.8 23.2 3.1 6.3 23.7 35.60 -0.50 56.0 pbd+03 4.30 2.70 pbd+03 knear pdd04 3.7 5.9 52.6 3.5 5.6 50.7 3.5 6.0 50.7 35.60 0.10 50.5 pbd+03 1.70 2.70 pbd+03 kfar pdd04 10.5 6.1 77.4 9.9 5.7 74.4 10.4 6.1 76.9 35.67 -0.04 51.9 ab09 0.40 4.86 was+03 kfar ab09 10.4 6.1 48.4 9.8 5.7 46.5 10.4 6.0 48.4 36.29 0.73 76.5 kb94 3.00 2.70 pbd+03 knear kb94 5.1 5.3 57.8 4.7 5.0 54.7 4.7 5.5 54.7 36.30 -1.70 63.5 pbd+03 10.00 2.70 pbd+03 1.8 0.5 rus03 knear pdd04 4.2 5.7 43.1 43.1 43.1 36.40 0.02 53.3 was+03 0.08 4.86 was+03 knear was+03 3.5 6.0 13.7 3.3 5.7 13.2 3.4 6.1 13.4 36.50 -0.20 72.7 pbd+03 1.30 2.70 pbd+03 kfar pdd04 8.9 5.5 63.4 8.4 5.1 61.0 9.0 5.5 63.9 37.20 -0.43 38.0 was+03 0.12 4.86 was+03 kfar was+03 11.0 6.6 33.6 10.3 6.2 32.2 10.8 6.5 33.2 37.37 -0.24 39.4 was+03 0.26 4.86 was+03 kfar was+03 10.9 6.6 43.3 10.2 6.2 41.4 10.7 6.5 42.8 37.40 -0.10 54.1 pbd+03 3.90 2.70 pbd+03 kfar pdd04 9.9 6.1 98.1 9.3 5.7 94.1 9.9 6.0 98.1 37.40 -0.00 54.1 pbd+03 4.60 2.70 pbd+03 kfar pdd04 9.9 6.1 103.7 9.3 5.7 99.5 9.9 6.0 103.7 37.50 -0.10 49.0 pbd+03 11.10 2.70 pbd+03 kfar pdd04 10.2 6.2 141.9 9.6 5.9 136.3 10.2 6.2 141.9 37.60 -0.10 53.8 pbd+03 2.10 2.70 pbd+03 kfar pdd04 9.9 6.1 79.8 9.3 5.7 76.5 9.9 6.1 79.8 37.67 0.13 88.9 ab09 3.70 2.70 pbd+03 kfar ab09 7.8 5.1 82.3 7.2 4.8 78.0 7.2 5.2 78.0 37.70 -0.10 57.8 pbd+03 0.60 2.70 pbd+03 kfar pdd04 9.6 6.0 51.5 9.1 5.6 49.7 9.6 5.9 51.5 37.75 -0.10 49.7 was+03 0.37 4.86 was+03 kfar was+03 10.1 6.2 46.3 9.5 5.8 44.4 10.1 6.2 46.3 37.76 -0.20 66.6 was+03 1.20 4.86 was+03 kfar was+03 9.0 5.7 63.4 8.5 5.4 61.0 9.1 5.7 63.9 37.90 -0.40 59.1 pbd+03 5.90 2.70 pbd+03 kfar pdd04 9.5 5.9 109.6 8.9 5.6 104.9 9.5 5.9 109.6 38.10 -0.00 58.3 pbd+03 0.50 2.70 pbd+03 kfar pdd04 9.5 6.0 48.1 8.9 5.6 46.1 9.5 6.0 48.1 39.25 -0.07 23.0 was+03 0.67 4.86 was+03 kfar was+03 11.6 7.4 61.8 10.8 6.9 58.9 11.3 7.2 60.7 39.90 -1.30 44.3 pbd+03 3.00 2.70 pbd+03 2.1 0.6 rus03 knear pdd04 3.0 6.5 32.0 32.0 32.0 40.42 0.70 20.1 was+03 0.07 4.86 was+03 kfar was+03 11.6 7.5 29.1 10.8 7.0 27.7 11.3 7.3 28.6 40.50 2.50 23.0 pbd+03 8.80 2.70 pbd+03 knear pdd04 1.6 7.4 38.2 1.6 6.9 38.2 1.7 7.3 39.8 40.95 -0.57 60.9 ab09 0.90 2.70 pbd+03 knear ab09 4.2 6.0 34.0 4.0 5.6 32.9 4.1 6.1 33.5 41.10 -0.20 59.4 pbd+03 4.90 2.70 pbd+03 kfar pdd04 8.7 6.0 97.2 8.2 5.7 93.4 8.7 6.0 97.2 41.20 0.40 71.3 pbd+03 1.00 2.70 pbd+03 knear pdd04 5.4 5.7 41.6 5.0 5.4 39.5 4.9 5.8 39.0 41.50 0.00 17.5 pbd+03 1.00 2.70 pbd+03 kfar pdd04 11.6 7.7 69.3 10.8 7.1 66.1 11.2 7.4 67.7 41.74 0.10 11.1 ahck02 0.34 4.86 ahck02 kfar ahck02 12.0 8.0 50.4 11.2 7.4 48.1 11.6 7.7 49.3 41.91 -0.12 18.1 ab09 0.04 4.85 GB6 kfar ab09 11.4 7.7 23.9 10.7 7.1 22.9 11.1 7.4 23.5 42.10 -0.60 66.0 pbd+03 3.40 2.70 pbd+03 knear pdd04 4.9 5.9 58.7 4.6 5.5 56.3 4.6 6.0 56.3 42.11 -0.44 53.4 was+03 0.20 4.86 was+03 kfar was+03 8.9 6.3 34.6 8.3 5.9 33.0 8.8 6.2 34.3 42.40 -0.38 65.0 ab09 0.04 4.85 GB6 knear ab09 4.8 5.9 13.4 4.5 5.6 12.8 4.5 6.0 12.8 42.40 -0.30 63.2 pbd+03 1.20 2.70 pbd+03 kfar pdd04 7.9 6.0 57.0 7.5 5.6 55.1 8.0 6.0 57.5 42.57 -0.14 67.2 ab09 2.20 2.70 pbd+03 kfar ab09 7.4 5.9 66.8 6.9 5.5 63.8 7.6 5.9 68.0 43.17 0.00 7.4 was+03 13.96 4.86 was+03 kfar was+03 12.0 8.2 174.0 11.1 7.6 165.2 11.5 7.9 169.1 43.18 -0.52 59.1 ab09 1.20 2.70 pbd+03 kfar ab09 8.1 6.1 58.0 7.6 5.7 55.6 8.1 6.1 58.0 43.24 -0.05 9.4 was+03 0.79 4.86 was+03 kfar was+03 11.8 8.1 66.1 11.0 7.5 63.1 11.4 7.8 64.6 43.79 -0.12 43.3 was+03 0.11 4.86 was+03 kfar was+03 9.2 6.7 29.0 8.6 6.2 27.7 9.1 6.6 28.8 43.89 -0.78 53.4 ahck02 0.66 4.86 ahck02 kfar ahck02 8.4 6.3 49.6 7.9 5.9 47.6 8.3 6.3 49.2 44.26 0.10 59.6 ab09 1.20 2.70 pbd+03 kfar ab09 7.7 6.1 56.0 7.2 5.8 53.5 7.7 6.2 56.0 44.79 -0.49 44.8 ab09 1.00 2.70 pbd+03 kfar ab09 8.9 6.6 58.1 8.3 6.2 55.5 8.7 6.6 57.2 45.07 0.13 59.2 ab09 0.47 4.86 ahck02 kfar ab09 7.4 6.2 40.7 6.9 5.8 38.8 7.4 6.2 40.7 45.12 0.13 56.7 ab09 4.28 4.86 ahck02 kfar ab09 7.7 6.2 87.3 7.2 5.9 83.5 7.7 6.3 87.3 45.45 0.06 55.6 ab09 4.77 4.86 ahck02 kfar ab09 7.7 6.3 90.5 7.2 5.9 86.5 7.7 6.3 90.5 45.47 0.05 60.1 ahck02 0.75 4.86 ahck02 ktan ahck02 6.0 6.1 41.4 45.82 -0.29 61.2 ab09 0.43 4.86 was+03 kfar ab09 6.6 6.1 36.6 6.2 5.8 35.1 6.8 6.2 37.3 45.93 -0.40 63.9 ab09 0.11 4.86 was+03 kfar ab09 6.7 6.1 23.5 6.3 5.7 22.6 5.8 6.1 21.3 46.50 -0.20 57.2 pbd+03 5.40 2.70 pbd+03 knear pdd04 4.7 6.3 66.6 4.5 5.9 64.7 4.5 6.3 64.7 48.60 0.00 19.1 pbd+03 13.00 2.70 pbd+03 kfar pdd04 9.9 7.7 146.6 9.2 7.2 139.6 9.6 7.5 143.6 48.60 0.20 10.7 pbd+03 2.70 2.70 pbd+03 kfar pdd04 10.6 8.1 90.9 9.8 7.5 86.3 10.1 7.8 88.0 48.93 -0.29 66.5 ab09 23.70 2.70 pbd+03 kfar ab09 7.6 6.1 150.2 7.2 5.7 144.9 5.5 6.4 121.1 49.00 -0.30 64.8 pbd+03 113.00 2.70 pbd+03 5.1 2.2 xrm+08 193.7 193.7 193.7 49.10 -0.70 pbd+03 34.00 2.70 pbd+03 5.1 2.2 xrm+08 129.8 129.8 129.8 49.10 -0.40 71.2 pbd+03 11.20 2.70 pbd+03 5.1 2.2 xrm+08 89.6 89.6 89.6 49.20 -0.30 68.6 pbd+03 23.80 2.70 pbd+03 5.1 2.2 xrm+08 115.3 115.3 115.3 49.50 -0.40 57.5 pbd+03 119.00 2.70 pbd+03 5.1 2.2 xrm+08 197.1 197.1 197.1 51.20 -0.10 pbd+03 39.40 2.70 pbd+03 5.1 2.2 xrm+08 136.3 136.3 136.3 49.06 -0.26 64.1 ab09 1.10 2.70 pbd+03 knear ab09 3.7 6.2 33.4 3.5 5.8 32.2 5.5 6.4 43.5 49.37 -0.30 53.7 kjb+03 28.60 2.70 pbd+03 kfar kjb+03 5.7 6.5 132.0 5.7 6.1 132.0 5.8 6.5 133.5 49.40 -0.20 48.0 pbd+03 5.00 2.70 pbd+03 kfar pdd04 7.1 6.6 85.4 6.5 6.2 80.5 6.9 6.6 83.8 49.44 -0.47 60.5 ab09 4.90 2.70 pbd+03 kfar ab09 7.1 6.3 84.8 6.8 5.9 82.4 5.5 6.5 71.5 49.58 -0.38 62.1 ab09 7.60 2.70 pbd+03 knear ab09 3.7 6.2 63.6 3.5 5.8 61.3 5.4 6.5 81.8 49.59 -0.46 64.2 ab09 1.90 2.70 pbd+03 knear ab09 3.5 6.2 38.6 3.3 5.8 37.1 5.4 6.5 51.5 49.67 -0.45 62.7 was+03 0.08 4.86 was+03 ktan was+03 5.5 6.5 18.5 5.2 6.1 17.8 5.4 6.4 18.3 49.70 -0.17 57.0 ab09 0.03 4.85 GB6 ktan ab09 5.5 6.5 13.4 5.2 6.1 12.9 5.4 6.4 13.2 50.02 -0.08 66.8 kb94 2.20 2.70 pbd+03 ktan kb94 5.5 6.5 54.8 5.1 6.1 52.1 5.4 6.4 54.1 50.10 -0.70 72.0 pbd+03 4.00 2.70 pbd+03 ktan hh09 5.5 6.5 66.9 5.1 6.1 63.6 5.4 6.4 66.1 50.20 0.30 71.2 pbd+03 0.80 2.70 pbd+03 ktan hh09 5.4 6.5 38.6 5.1 6.1 37.2 5.4 6.5 38.6 50.28 -0.39 10.3 was+03 0.27 4.86 was+03 kfar was+03 10.2 8.1 41.9 9.5 7.5 40.0 9.8 7.8 40.8 50.29 0.69 25.9 pmg08 0.27 1.40 ccg+98 kfar pmg08 9.0 7.4 37.0 8.3 6.9 35.1 8.6 7.3 35.9 51.10 0.20 42.9 pbd+03 5.90 2.70 pbd+03 kfar pdd04 7.1 6.8 90.3 6.5 6.4 85.1 6.8 6.8 87.7

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 15

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 51.17 -0.74 44.3 ab09 0.04 4.85 GB6 kfar ab09 6.9 6.8 17.1 6.3 6.4 16.1 6.6 6.7 16.6 51.20 0.10 55.3 pbd+03 41.00 2.70 pbd+03 ktan hh09 5.3 6.6 141.7 5.0 6.2 136.3 5.3 6.6 141.7 51.36 0.00 52.7 ab09 4.00 2.70 pbd+03 kfar ab09 6.5 6.5 74.8 6.2 6.1 72.5 5.2 6.6 64.5 52.20 0.70 2.2 pbd+03 2.00 2.70 pbd+03 kout hh09 10.4 8.5 81.2 9.9 8.2 78.6 52.20 -0.50 47.6 pbd+03 3.00 2.70 pbd+03 ktan hh09 5.2 6.7 58.5 4.9 6.3 56.2 5.2 6.6 58.5 52.23 0.74 -3.0 was+03 0.24 4.86 was+03 kfar was+03 10.9 8.8 42.1 10.0 8.1 39.7 10.2 8.4 40.3 52.80 0.30 16.6 pbd+03 0.50 2.70 pbd+03 kfar pdd04 9.1 7.9 46.8 8.4 7.3 44.4 8.7 7.6 45.4 52.94 -0.59 43.5 ab09 7.00 2.70 pbd+03 kfar ab09 6.1 6.8 86.4 5.4 6.4 79.7 5.7 6.8 82.6 53.18 0.16 8.3 kb94 9.00 2.70 pbd+03 kfar kb94 9.7 8.2 127.9 9.0 7.6 121.7 9.2 7.9 123.5 53.50 0.00 24.0 rus03 0.60 2.70 pbd+03 1.4 0.4 rus03 knear pdd04 1.8 7.6 14.3 14.3 14.3 53.60 0.20 38.0 pbd+03 7.00 2.70 pbd+03 kfar pdd04 6.7 7.0 91.9 6.1 6.6 86.3 6.4 7.0 89.1 54.10 -0.06 42.8 ab09 0.34 4.86 was+03 kfar ab09 5.4 6.9 29.6 5.3 6.5 29.2 4.9 6.9 27.7 55.10 2.40 -79.7 pbd+03 1.10 2.70 pbd+03 kout hh09 19.1 15.8 99.7 17.3 14.3 93.3 16.7 13.7 91.2 55.90 -3.80 29.6 rus03 4.5 1.3 rus03 57.55 -0.27 6.3 was+03 0.24 4.86 was+03 kfar was+03 8.8 8.3 36.5 8.1 7.7 34.5 8.2 8.0 34.8 59.50 -0.20 29.4 pbd+03 15.00 2.70 pbd+03 2.3 0.25 rus03 58.1 58.1 58.1 59.60 0.92 46.8 was+03 0.05 4.86 was+03 ktan was+03 4.3 7.3 13.4 4.0 6.9 12.8 4.3 7.3 13.4 59.80 0.20 -3.3 pbd+03 1.10 2.70 pbd+03 kout hh09 9.1 8.8 60.8 8.3 8.1 57.2 8.4 8.4 57.6 60.90 -0.10 18.6 pbd+03 2.00 2.70 pbd+03 2.2 0.3 rus03 knear ahck02 1.7 7.8 28.8 28.8 28.8 61.50 0.10 27.3 pbd+03 9.00 2.70 pbd+03 2.2 0.3 rus03 47.6 47.6 47.6 62.90 0.10 19.2 pbd+03 0.60 2.70 pbd+03 2.2 0.3 rus03 19.3 19.3 19.3 62.90 0.10 19.2 pbd+03 0.30 2.70 pbd+03 2.2 0.3 rus03 knear pdd04 1.9 7.8 15.3 15.3 15.3 63.05 -0.34 -9.3 was+03 0.04 4.86 was+03 kfar was+03 8.9 9.1 20.3 8.1 8.4 19.1 8.0 8.7 18.9 63.20 0.40 15.3 pbd+03 5.10 2.70 pbd+03 knear pdd04 1.4 8.0 29.1 1.6 7.4 31.8 2.0 7.8 36.9 63.20 0.50 19.4 pbd+03 7.00 2.70 pbd+03 2.2 0.3 rus03 knear pdd04 1.9 7.8 43.8 43.8 43.8 64.10 -0.50 23.6 pbd+03 1.50 2.70 pbd+03 3.9 0.5 rus03 38.4 38.4 38.4 66.80 0.90 21.0 pbd+03 0.60 2.70 pbd+03 ktan hh09 3.3 7.8 25.3 3.2 7.4 24.8 3.3 7.7 25.3 68.10 0.90 -32.5 pbd+03 0.90 2.70 pbd+03 kout hh09 9.9 10.3 60.2 8.9 9.5 56.1 8.8 9.7 55.7 68.20 1.00 pbd+03 10.00 2.70 pbd+03 3.6 1.1 rus03 68.4 68.4 68.4 69.90 1.50 -63.2 pbd+03 4.90 2.70 pbd+03 kout hh09 12.7 12.6 125.0 11.5 11.5 117.0 11.1 11.4 114.3 70.20 1.70 -22.9 pbd+03 2.20 2.70 pbd+03 7.0 1.5 rus03 64.4 64.4 64.4 70.29 1.60 -24.2 ahck02 4.37 4.86 ahck02 7.0 1.5 rus03 82.5 82.5 82.5 70.33 1.59 -21.1 ahck02 2.21 4.86 ahck02 7.0 1.5 rus03 65.7 65.7 65.7 71.60 2.80 16.0 pbd+03 5.30 2.70 pbd+03 2.8 0.8 rus03 46.8 46.8 46.8 74.80 0.60 -2.2 pbd+03 11.70 2.70 pbd+03 3.1 0.9 rus03 65.3 65.3 65.3 75.40 -0.40 -0.8 pbd+03 0.70 2.70 pbd+03 kout hh09 4.9 8.7 34.6 4.1 8.0 30.7 3.6 8.4 28.2 75.80 0.30 -8.5 pbd+03 5.00 2.70 pbd+03 kout hh09 5.7 9.0 73.8 5.0 8.3 67.6 4.6 8.6 64.0 75.80 0.40 -4.2 pbd+03 11.80 2.70 pbd+03 kout hh09 5.2 8.8 92.4 4.5 8.2 83.9 4.1 8.5 78.9 76.20 -0.30 -28.2 pbd+03 1.50 2.70 pbd+03 kout hh09 7.7 10.0 60.4 6.9 9.2 56.1 6.6 9.4 54.5 77.40 -3.70 8.1 rus03 0.10 2.70 pbd+03 2.6 0.8 rus03 11.9 11.9 11.9 78.00 -0.00 -1.0 pbd+03 17.90 2.70 pbd+03 kout hh09 4.2 8.7 92.1 3.5 8.0 81.6 2.7 8.4 68.6 78.00 0.60 1.3 pbd+03 9.00 2.70 pbd+03 kout hh09 3.9 8.6 69.7 1.8 8.3 41.6 78.20 -0.40 0.5 pbd+03 44.20 2.70 pbd+03 kout hh09 4.0 8.6 120.5 1.7 8.3 68.1 78.30 1.40 -0.9 pbd+03 1.70 2.70 pbd+03 kout hh09 4.1 8.7 41.3 3.4 8.0 36.5 2.6 8.4 30.5 78.30 1.50 -3.7 pbd+03 3.10 2.70 pbd+03 kout hh09 4.5 8.8 53.7 3.8 8.1 48.0 3.2 8.5 42.8 78.30 2.80 -5.4 pbd+03 3.60 2.70 pbd+03 kout hh09 4.8 8.9 59.0 4.1 8.2 53.1 3.6 8.5 48.7 78.40 2.70 -0.5 pbd+03 1.50 2.70 pbd+03 kout hh09 4.1 8.7 39.7 3.3 8.0 34.4 2.4 8.4 27.8 78.50 -0.00 -7.8 pbd+03 4.90 2.70 pbd+03 kout hh09 5.0 9.0 67.2 4.3 8.3 60.8 3.8 8.6 56.0 78.50 1.20 -4.5 pbd+03 155.20 2.70 pbd+03 kout hh09 4.6 8.8 201.0 3.9 8.2 180.1 3.3 8.5 161.1 78.60 0.80 -4.5 pbd+03 8.00 2.70 pbd+03 kout hh09 4.6 8.8 74.8 3.9 8.2 67.0 3.3 8.5 59.9 78.70 -0.60 -7.9 pbd+03 15.50 2.70 pbd+03 kout hh09 5.0 9.0 98.6 4.3 8.3 89.2 3.8 8.6 82.1 78.70 0.90 3.0 pbd+03 5.90 2.70 pbd+03 kout hh09 3.4 8.5 55.3 1.6 8.3 33.5 79.20 -0.30 -3.3 pbd+03 5.00 2.70 pbd+03 kout hh09 4.3 8.8 61.1 3.6 8.1 54.3 2.8 8.4 45.9 79.20 -0.10 -5.0 pbd+03 21.80 2.70 pbd+03 kout hh09 4.5 8.8 103.0 3.8 8.2 92.0 3.2 8.5 82.1 79.20 0.30 -3.9 pbd+03 5.30 2.70 pbd+03 kout hh09 4.4 8.8 63.3 3.6 8.1 55.4 3.0 8.5 49.0 79.30 1.30 -41.2 pbd+03 27.50 2.70 pbd+03 kout hh09 8.4 10.8 168.7 7.5 9.9 156.4 7.1 10.0 150.8 79.30 0.30 8.5 pbd+03 34.30 2.70 pbd+03 ktan hh09 1.6 8.4 60.1 1.5 7.9 57.6 1.6 8.3 60.1 79.40 -0.80 1.6 pbd+03 24.40 2.70 pbd+03 kout hh09 3.4 8.6 88.7 1.6 8.4 53.7 79.40 2.40 3.0 pbd+03 70.70 2.70 pbd+03 kout hh09 3.2 8.5 121.4 1.6 8.4 76.5 79.80 0.10 -7.2 pbd+03 1.90 2.70 pbd+03 kout hh09 4.7 8.9 47.0 4.0 8.3 42.2 3.4 8.6 37.9 80.00 -0.00 -1.0 pbd+03 4.20 2.70 pbd+03 kout hh09 3.7 8.7 52.2 3.0 8.0 45.4 1.5 8.4 28.6 80.00 0.90 -14.8 pbd+03 3.20 2.70 pbd+03 kout hh09 5.5 9.3 62.1 4.8 8.6 56.7 4.4 8.9 53.5 80.00 1.50 -15.4 pbd+03 4.30 2.70 pbd+03 kout hh09 5.6 9.3 69.3 4.9 8.6 63.4 4.5 8.9 59.9 80.00 2.10 -4.7 pbd+03 28.10 2.70 pbd+03 kout hh09 4.3 8.8 108.7 3.6 8.2 96.6 3.0 8.5 85.5 80.10 -0.10 -2.2 pbd+03 66.00 2.70 pbd+03 kout hh09 3.9 8.7 135.4 3.2 8.1 118.7 2.2 8.4 92.4 80.20 0.80 -1.2 pbd+03 2.10 2.70 pbd+03 kout hh09 3.7 8.7 41.4 3.0 8.0 36.0 1.4 8.4 21.7 80.30 0.70 -62.4 pbd+03 4.90 2.70 pbd+03 kout hh09 10.4 12.3 109.4 9.3 11.2 101.5 8.8 11.2 97.9 80.30 0.80 -63.4 pbd+03 25.30 2.70 pbd+03 kout hh09 10.5 12.4 190.4 9.4 11.3 176.9 8.9 11.3 170.5 80.40 0.40 9.7 pbd+03 53.20 2.70 pbd+03 ktan hh09 1.4 8.4 63.6 1.3 7.9 60.5 1.4 8.3 63.6 80.40 0.50 7.5 pbd+03 30.80 2.70 pbd+03 ktan hh09 1.4 8.4 53.0 1.3 7.9 50.4 1.4 8.3 53.0 80.60 1.50 11.3 pbd+03 15.70 2.70 pbd+03 ktan hh09 1.4 8.4 42.4 1.3 7.9 40.4 1.4 8.3 42.4 80.90 -0.30 0.6 pbd+03 3.90 2.70 pbd+03 kout hh09 3.2 8.6 46.2 1.3 8.4 25.3 80.90 -0.20 -1.0 pbd+03 30.20 2.70 pbd+03 kout hh09 3.5 8.7 97.1 2.7 8.0 81.7 1.3 8.4 50.2 80.90 -0.10 -2.1 pbd+03 14.00 2.70 pbd+03 kout hh09 3.7 8.7 78.0 3.0 8.1 67.8 1.7 8.4 46.4 80.90 0.40 1.8 pbd+03 7.90 2.70 pbd+03 kout hh09 3.0 8.6 56.0 1.3 8.4 32.1 81.30 1.10 12.5 pbd+03 12.30 2.70 pbd+03 ktan hh09 1.3 8.4 37.2 1.2 7.9 35.3 1.3 8.3 37.2 81.30 1.20 11.4 pbd+03 10.70 2.70 pbd+03 ktan hh09 1.3 8.4 35.5 1.2 7.9 33.7 1.3 8.3 35.5 81.50 -0.00 -0.7 pbd+03 6.00 2.70 pbd+03 kout hh09 3.3 8.7 54.5 2.5 8.0 45.3 1.2 8.4 27.8 81.50 0.60 0.7 pbd+03 78.40 2.70 pbd+03 kout hh09 3.1 8.6 123.1 1.2 8.4 65.4 81.60 2.10 -6.9 pbd+03 3.80 2.70 pbd+03 kout hh09 4.2 8.9 54.9 3.5 8.3 48.6 2.9 8.6 42.9 81.70 0.50 -0.2 pbd+03 15.50 2.70 pbd+03 kout hh09 3.2 8.6 73.2 2.4 8.0 60.4 1.2 8.4 38.1 81.70 0.30 10.5 pbd+03 0.20 2.70 pbd+03 ktan hh09 1.2 8.4 8.9 1.2 7.9 8.9 1.2 8.3 8.9 81.87 0.78 1.7 pmg08 0.09 1.40 ccg+98 kfar pmg08 2.8 8.6 11.8 1.7 7.9 8.5 1.2 8.4 6.7

16 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 82.00 2.30 -5.1 pbd+03 1.90 2.70 pbd+03 kout hh09 3.9 8.8 41.5 3.2 8.2 36.4 2.5 8.5 30.9 82.30 2.40 -3.3 pbd+03 104.90 2.70 pbd+03 kout hh09 3.6 8.8 149.8 2.8 8.1 126.7 1.9 8.5 97.8 82.40 2.50 -4.6 pbd+03 18.30 2.70 pbd+03 kout hh09 3.7 8.8 85.2 3.0 8.2 74.1 2.2 8.5 60.2 82.60 0.40 -9.6 pbd+03 25.30 2.70 pbd+03 kout hh09 4.4 9.0 106.6 3.7 8.4 95.0 3.1 8.7 84.4 83.80 3.30 5.9 pbd+03 8.00 2.70 pbd+03 ktan hh09 0.9 8.5 25.2 0.9 8.0 25.2 0.9 8.4 25.2 84.80 3.80 -9.6 pbd+03 11.60 2.70 pbd+03 kout hh09 4.0 9.0 77.1 3.3 8.4 67.8 2.7 8.7 59.3 84.80 -3.50 5.2 pbd+03 0.10 2.70 pbd+03 ktan hh09 0.8 8.5 5.4 0.7 8.0 4.9 0.8 8.4 5.4 84.90 -1.20 5.5 pbd+03 0.50 2.70 pbd+03 ktan hh09 0.8 8.5 9.2 0.7 8.0 8.4 0.8 8.4 9.2 85.20 -0.10 -0.9 pbd+03 1.50 2.70 pbd+03 kout hh09 2.6 8.7 29.3 1.7 8.0 22.1 0.7 8.5 12.2 85.20 0.00 -31.2 pbd+03 1.50 2.70 pbd+03 kout hh09 6.3 10.1 52.8 5.5 9.3 48.2 5.1 9.5 45.9 85.50 -1.00 3.4 rus03 1.0 0.3 rus03 116.0 116.0 116.0 87.60 -3.80 2.8 rus03 0.9 0.3 rus03 47.0 47.0 47.0 90.20 1.70 -60.9 pbd+03 1.00 2.70 pbd+03 kout hh09 8.6 12.1 56.8 7.6 11.1 52.3 7.0 11.1 49.5 90.20 2.10 -65.6 pbd+03 0.10 2.70 pbd+03 kout hh09 9.1 12.5 27.4 8.1 11.4 25.4 7.5 11.3 24.1 93.10 2.80 -61.0 pbd+03 2.80 2.70 pbd+03 6.3 1.1 rus03 65.0 65.0 65.0 94.40 -5.50 0.9 pbd+03 1.90 2.70 pbd+03 0.9 0.04 rus03 15.6 15.6 15.6 94.50 -1.50 -38.6 rus03 2.30 2.70 pbd+03 3.6 0.8 rus03 41.9 41.9 41.9 95.40 16.80 -4.0 rus03 0.4 0.04 rus03 96.00 2.00 -74.0 rus03 9.6 0.4 rag07 74.7 74.7 74.7 96.30 2.60 -95.0 rus03 0.60 2.70 pbd+03 9.7 2.9 rus03 51.9 51.9 51.9 96.30 -0.20 -54.2 rus03 8.88 0.61 rag07 45.1 45.1 45.1 97.60 3.20 -72.5 pbd+03 0.70 2.70 pbd+03 kout hh09 9.0 13.2 52.0 7.9 12.0 47.7 7.2 11.9 44.8 99.10 7.40 -13.9 pbd+03 0.20 2.70 pbd+03 kout hh09 2.5 9.3 14.6 2.0 8.6 12.6 1.5 8.9 10.4 99.30 3.70 -2.0 rus03 0.9 0.04 rus03 59.0 59.0 59.0 100.00 10.00 -9.6 rus03 0.6 0.1 rus03 101.40 2.70 -61.0 rus03 0.20 2.70 pbd+03 5.25 0.29 rag07 kout hh09 7.2 12.2 23.7 23.7 23.7 102.90 -0.70 -48.1 pbd+03 2.60 2.70 pbd+03 3.1 0.3 rus03 39.5 39.5 39.5 103.00 -0.80 -48.5 pbd+03 2.70 2.70 pbd+03 kout hh09 5.7 11.3 60.1 5.0 10.3 55.1 4.4 10.4 50.6 103.70 2.20 -16.1 pbd+03 0.60 2.70 pbd+03 1.2 0.25 rus03 12.9 12.9 12.9 104.60 1.40 -20.7 pbd+03 1.40 2.70 pbd+03 1.2 0.25 rus03 17.1 17.1 17.1 105.20 7.10 -10.3 pbd+03 0.20 2.70 pbd+03 0.7 0.1 rus03 6.2 6.2 6.2 105.60 0.40 -52.0 rus03 0.70 2.70 pbd+03 2.91 1.4 rag07 24.4 24.4 24.4 106.80 3.30 -65.0 pbd+03 0.60 2.70 pbd+03 8.34 0.6 rag07 46.8 46.8 46.8 106.80 5.30 -8.5 pbd+03 0.70 2.70 pbd+03 0.9 0.1 rus03 11.2 11.2 11.2 107.20 -1.00 -36.0 pbd+03 6.60 2.70 pbd+03 3.7 0.25 rus03 60.7 60.7 60.7 107.30 -0.90 -41.0 pbd+03 0.60 2.70 pbd+03 kout hh09 4.6 10.8 31.5 4.0 9.9 28.7 3.4 10.1 25.8 108.20 0.60 -56.3 pbd+03 1.50 2.70 pbd+03 kout hh09 6.2 12.0 52.2 5.4 10.9 47.6 4.8 11.0 44.0 108.20 5.60 -8.8 pbd+03 0.10 2.70 pbd+03 0.9 0.1 rus03 5.9 5.9 5.9 108.30 -1.00 -55.2 rus03 0.60 2.70 pbd+03 5.3 1.1 rus03 34.7 34.7 34.7 108.80 -0.90 -50.1 pbd+03 0.90 2.70 pbd+03 2.39 0.21 rag07 22.7 22.7 22.7 108.80 -1.00 -49.1 pbd+03 1.80 2.70 pbd+03 2.39 0.21 rag07 28.7 28.7 28.7 109.10 -0.30 -47.0 pbd+03 0.40 2.70 pbd+03 kout hh09 5.1 11.3 29.5 4.4 10.3 26.7 3.9 10.4 24.7 109.20 1.50 -11.5 pbd+03 0.50 2.70 pbd+03 0.7 0.04 rus03 8.5 8.5 8.5 110.10 0.10 -49.8 pbd+03 2.10 2.70 pbd+03 kout hh09 5.4 11.5 53.3 4.6 10.5 47.9 4.1 10.6 44.4 110.10 0.00 -51.7 pbd+03 2.50 2.70 pbd+03 3.0 0.7 rag07 38.2 38.2 38.2 110.20 2.50 -10.0 pbd+03 5.00 2.70 pbd+03 0.7 0.04 rus03 18.2 18.2 18.2 111.30 -0.70 -43.0 pbd+03 1.20 2.70 pbd+03 kout hh09 4.6 11.0 39.7 3.9 10.1 35.6 3.4 10.2 32.5 111.50 0.80 -60.8 pbd+03 28.60 2.70 pbd+03 2.4 0.14 rag07 74.1 74.1 74.1 111.60 0.90 -60.6 pbd+03 0.60 2.70 pbd+03 2.65 0.1 mrm+08 21.6 21.6 21.6 111.60 0.40 -64.5 pbd+03 2.20 2.70 pbd+03 2.4 0.14 rag07 31.5 31.5 31.5 111.90 4.10 5.8 rus03 1.1 0.3 rus03 112.20 0.20 -41.8 pbd+03 7.30 2.70 pbd+03 3.2 0.25 rus03 57.0 57.0 57.0 113.60 -0.70 -42.7 pbd+03 6.90 2.70 pbd+03 3.53 0.17 rag07 59.3 59.3 59.3 114.60 0.20 -33.0 rus03 1.7 0.5 rus03 19.0 19.0 19.0 115.00 3.20 -63.6 pbd+03 0.20 2.70 pbd+03 kout hh09 6.7 12.9 28.1 5.9 11.7 25.8 5.2 11.7 23.7 115.80 -1.60 -40.8 pbd+03 1.60 2.70 pbd+03 2.5 0.5 rus03 29.1 29.1 29.1 117.60 2.30 -43.7 rus03 2.30 2.70 pbd+03 2.6 0.27 rag07 33.8 33.8 33.8 118.10 5.00 -9.1 pbd+03 9.50 2.70 pbd+03 0.7 0.04 rus03 22.6 22.6 22.6 118.60 -1.30 -40.8 pbd+03 2.10 2.70 pbd+03 3.12 0.34 rag07 36.8 36.8 36.8 119.40 -0.90 pbd+03 2.60 2.70 pbd+03 3.12 0.34 rag07 39.5 39.5 39.5 119.40 -0.80 -34.5 pbd+03 0.60 2.70 pbd+03 3.12 0.34 rag07 24.2 24.2 24.2 120.40 2.00 -49.0 rus03 0.10 2.70 pbd+03 1.09 0.21 rag07 6.3 6.3 6.3 122.60 0.10 -42.3 rus03 5.3 1.6 rus03 123.00 3.00 -10.3 pbd+03 0.30 2.70 pbd+03 kout hh09 1.1 9.2 9.6 0.8 8.5 7.8 0.5 8.8 5.7 123.10 -6.30 -29.7 pbd+03 8.40 2.70 pbd+03 2.9 0.4 rus03 55.9 55.9 55.9 123.20 -6.30 -30.4 pbd+03 4.30 2.70 pbd+03 2.9 0.4 rus03 44.7 44.7 44.7 124.00 -1.90 +3.0 rus03 0.2 0.1 rus03 124.90 0.30 -43.0 pbd+03 0.20 2.70 pbd+03 kout hh09 4.2 11.5 20.6 3.6 10.5 18.6 3.1 10.6 16.8 132.20 -0.70 -56.6 pbd+03 0.60 2.70 pbd+03 kout hh09 6.2 13.5 38.5 5.3 12.3 34.7 4.6 12.1 31.6 133.70 1.20 -40.1 pbd+03 79.10 2.70 pbd+03 2.3 0.25 rus03 101.1 101.1 101.1 133.80 1.40 -47.7 pbd+03 17.90 2.70 pbd+03 2.3 0.25 rus03 61.6 61.6 61.6 136.10 2.10 -46.3 rus03 0.10 2.70 pbd+03 2.4 0.32 rag07 11.3 11.3 11.3 136.50 2.50 -45.1 pbd+03 0.20 2.70 pbd+03 kout hh09 4.9 12.5 22.8 4.2 11.4 20.6 3.6 11.4 18.6 136.90 1.00 -41.3 pbd+03 2.50 2.70 pbd+03 2.3 0.25 rus03 32.0 32.0 32.0 138.50 1.60 -34.6 pbd+03 1.20 2.70 pbd+03 2.3 0.25 rus03 25.0 25.0 25.0 140.00 2.00 -10.7 rus03 1.1 0.2 rus03 143.60 -1.80 -34.4 rus03 12.00 2.70 pbd+03 1.71 0.31 rag07 44.1 44.1 44.1 145.80 3.00 -26.0 rus03 4.0 1.2 rus03 148.50 -0.20 -17.5 rus03 0.8 0.2 rus03 20.0 20.0 20.0 150.60 0.90 -25.1 pbd+03 17.30 2.70 pbd+03 2.7 0.8 rus03 67.8 67.8 67.8 151.30 2.00 -32.9 rus03 0.10 2.70 pbd+03 7.5 1.6 rus03 24.0 24.0 24.0 151.60 -0.20 -49.9 pbd+03 12.40 2.70 pbd+03 10.1 1.7 rus03 145.3 145. 145. 154.60 2.40 -35.5 pbd+03 0.70 2.70 pbd+03 6.8 0.9 rus03 43.1 43.1 43.1

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 17

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 155.40 2.60 -40.1 pbd+03 1.60 2.70 pbd+03 6.8 0.9 rus03 56.8 56.8 56.8 157.10 -3.60 -31.0 pbd+03 0.10 2.70 pbd+03 kout hh09 5.6 13.8 19.8 4.8 12.5 17.9 3.9 12.2 15.6 159.10 3.30 -20.5 pbd+03 0.40 2.70 pbd+03 4.19 0.27 rag07 25.5 25.5 25.5 159.40 2.60 -24.5 pbd+03 0.10 2.70 pbd+03 4.19 0.27 rag07 16.1 16.1 16.1 160.30 0.90 -25.2 pbd+03 0.10 2.70 pbd+03 4.19 0.27 rag07 16.1 16.1 16.1 161.00 12.00 7.0 rus03 0.5 0.2 rus03 37.0 37.0 37.0 168.10 3.10 -22.6 rus03 0.10 2.70 pbd+03 3.8 1.1 rus03 15.3 15.3 15.3 168.60 0.00 -27.1 rus03 0.60 2.70 pbd+03 4.2 1.3 rus03 29.7 29.7 29.7 169.20 -0.90 -20.5 pbd+03 1.50 2.70 pbd+03 4.1 1.2 rus03 39.7 39.7 39.7 172.50 2.00 rus03 0.5 0.1 rus03 23.0 23.0 23.0 173.40 -0.20 -14.3 rus03 1.50 2.70 pbd+03 1.8 0.25 rus03 22.9 22.9 22.9 173.60 2.80 -24.5 pbd+03 3.70 2.70 pbd+03 1.6 0.3 rus03 28.6 28.6 28.6 173.60 -1.80 -7.2 pbd+03 2.10 2.70 pbd+03 4.3 0.25 rus03 45.8 45.8 45.8 173.90 0.30 -4.3 rus03 0.80 2.70 pbd+03 5.2 0.8 rus03 37.7 37.7 37.7 180.90 4.10 -6.5 rus03 1.40 2.70 pbd+03 4.9 1.0 rus03 43.6 43.6 43.6 182.40 0.20 0.0 rus03 0.90 2.70 pbd+03 2.2 0.7 rus03 22.1 22.1 22.1 188.90 0.80 3.0 rus03 0.90 2.70 pbd+03 4.2 1.3 rus03 34.0 34.0 34.0 189.00 4.00 -5.4 rus03 1.8 0.3 rus03 56.0 56.0 56.0 189.80 0.30 7.5 pbd+03 0.20 2.70 pbd+03 2.1 0.03 rmb+08 13.0 13.0 13.0 192.20 3.60 14.4 rus03 0.10 2.70 pbd+03 5.1 1.5 rus03 18.6 18.6 18.6 192.60 -0.00 5.8 pbd+03 1.40 2.70 pbd+03 2.46 0.16 rag07 27.1 27.1 27.1 192.90 -0.60 22.8 rus03 0.30 2.70 pbd+03 8.9 2.7 rus03 38.9 38.9 38.9 193.70 -2.20 6.0 rus03 1.6 0.5 rus03 194.70 15.60 0.3 rus03 0.5 0.1 rus03 7.0 7.0 7.0 195.10 12.00 12.0 rus03 0.5 0.1 rus03 195.70 -0.10 28.6 rus03 0.20 2.70 pbd+03 2.0 0.6 rus03 12.6 12.6 12.6 196.40 -1.70 17.1 pbd+03 0.70 2.70 pbd+03 4.2 1.3 rus03 31.3 31.3 31.3 196.40 -2.90 6.3 rus03 1.3 0.4 rus03 42.0 42.0 42.0 196.80 -3.10 25.6 pbd+03 0.10 2.70 pbd+03 kout hh09 6.4 14.8 21.6 5.5 13.4 19.5 4.8 13.2 17.8 196.90 10.40 12.0 pbd+03 0.10 2.70 pbd+03 kout hh09 2.3 10.8 10.9 2.0 9.9 9.9 1.9 10.3 9.6 197.80 -2.30 19.2 rus03 0.30 2.70 pbd+03 5.1 1.1 rus03 26.8 26.8 26.8 202.90 2.20 7.0 rus03 0.8 0.04 rus03 206.30 -2.10 14.8 rus03 1.9 0.25 rus03 126.0 126.0 126.0 206.50 16.40 5.0 pbd+03 77.20 2.70 pbd+03 0.4 0.04 rus03 31.3 31.3 31.3 206.60 16.20 9.6 pbd+03 0.10 2.70 pbd+03 0.4 0.04 rus03 3.4 3.4 3.4 208.40 19.10 8.0 pbd+03 2.30 2.70 pbd+03 0.4 0.04 rus03 9.7 9.7 9.7 208.70 -2.60 11.1 rus03 1.80 2.70 pbd+03 1.4 0.4 rus03 20.6 20.6 20.6 208.90 19.30 7.7 pbd+03 23.00 2.70 pbd+03 0.4 0.04 rus03 20.9 20.9 20.9 209.00 19.40 -2.3 pbd+03 392.00 2.70 pbd+03 0.4 0.04 rus03 53.7 53.7 53.7 210.60 -1.40 22.0 rag07 0.10 2.70 pbd+03 1.17 0.29 rag07 6.7 6.7 6.7 210.80 -2.60 49.4 pbd+03 0.10 2.70 pbd+03 7.89 0.27 rag07 24.7 24.7 24.7 211.14 -1.01 37.1 rag07 4.01 0.73 rag07 211.90 -1.20 45.0 pbd+03 0.10 2.70 pbd+03 7.89 0.27 rag07 24.7 24.7 24.7 213.70 12.60 12.0 pbd+03 9.80 2.70 pbd+03 kout hh09 1.3 9.6 34.5 1.1 8.9 30.9 0.9 9.3 27.0 213.80 0.60 45.3 pbd+03 0.10 2.70 pbd+03 7.89 0.27 rag07 24.7 24.7 24.7 216.10 0.00 22.6 rus03 0.10 2.70 pbd+03 1.7 0.5 rus03 8.9 8.9 8.9 218.10 -0.30 27.2 pbd+03 0.30 2.70 pbd+03 2.9 0.5 rus03 18.4 18.4 18.4 218.70 1.80 55.0 rus03 7.5 2.2 rus03 43.0 43.0 43.0 218.80 -4.60 51.1 rus03 0.30 2.70 pbd+03 8.5 0.25 rus03 37.7 37.7 37.7 220.70 -2.20 9.9 pbd+03 0.10 2.70 pbd+03 kout hh09 1.0 9.3 6.3 0.8 8.6 5.4 0.5 8.9 4.0 220.90 -2.50 13.4 pbd+03 0.30 2.70 pbd+03 kout hh09 1.3 9.6 10.8 1.0 8.8 9.1 0.8 9.1 7.8 221.80 -2.00 40.0 pbd+03 0.10 2.70 pbd+03 kout hh09 4.3 12.0 16.6 3.7 11.0 15.0 3.2 11.1 13.6 224.10 -2.00 18.4 pbd+03 3.60 2.70 pbd+03 1.0 0.04 rus03 20.7 20.7 20.7 224.20 -2.90 14.6 pbd+03 0.10 2.70 pbd+03 1.0 0.04 rus03 6.3 6.3 6.3 224.20 1.20 33.6 rus03 0.50 2.70 pbd+03 3.24 0.56 rag07 23.3 23.3 23.3 227.80 -0.20 56.5 rus03 3.7 1.1 rus03 54.0 54.0 54.0 231.50 -4.30 53.0 pbd+03 3.90 2.70 pbd+03 kout hh09 5.5 12.7 66.3 4.7 11.6 59.7 4.2 11.5 55.4 232.60 0.90 17.8 rus03 2.5 0.7 rus03 29.0 29.0 29.0 233.80 -0.20 40.2 pbd+03 1.70 2.70 pbd+03 4.3 0.4 rus03 42.7 42.7 42.7 234.30 -0.40 44.1 pbd+03 1.00 2.70 pbd+03 kout hh09 4.4 11.6 36.3 3.7 10.6 32.3 3.2 10.7 29.4 234.60 -0.20 44.0 pbd+03 0.60 2.70 pbd+03 kout hh09 4.3 11.6 30.2 3.7 10.6 27.3 3.2 10.7 24.8 234.80 10.10 16.0 rus03 1.3 0.4 rus03 17.0 17.0 17.0 235.50 -4.10 28.2 rus03 2.5 0.4 rus03 236.60 -2.10 26.3 rus03 2.3 0.7 rus03 237.00 -1.30 74.8 rus03 5.4 2.0 rus03 237.30 -6.50 18.0 rus03 1.6 0.25 rus03 238.50 -4.70 20.6 rus03 1.4 0.1 rus03 241.50 -0.60 70.1 rus03 4.7 0.6 rus03 243.20 0.40 53.9 pbd+03 14.70 2.70 pbd+03 4.0 0.25 rus03 83.5 83.5 83.5 246.00 1.20 62.9 rus03 6.7 1.1 rus03 247.50 2.20 40.8 rus03 4.0 0.8 rus03 247.80 -0.50 55.2 rus03 3.2 0.4 rus03 248.00 -5.50 51.3 rus03 4.4 0.5 rus03 253.00 -1.30 9.5 rus03 1.3 0.3 rus03 253.60 -0.20 36.3 pbd+03 19.00 2.70 pbd+03 3.0 0.3 rus03 75.1 75.1 75.1 254.70 0.20 64.0 pbd+03 3.80 2.70 pbd+03 7.6 0.9 cor+07 81.6 81.6 81.6 255.70 -2.40 9.6 rus03 0.5 0.1 rus03 260.10 0.60 7.1 rus03 1.2 0.2 rus03 261.40 0.80 7.1 rus03 1.0 0.04 rus03 262.90 -2.40 8.7 rus03 0.6 0.03 rus03 263.00 1.50 5.5 rus03 1.1 0.2 rus03 263.60 -0.50 1.0 pbd+03 2.10 2.70 pbd+03 kout hh09 1.0 8.7 17.3 0.3 8.0 7.8 264.30 1.50 12.0 pbd+03 3.20 2.70 pbd+03 3.1 0.9 rus03 42.4 42.4 42.4

18 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 264.30 0.30 9.0 rus03 1.7 0.3 rus03 264.40 1.10 6.0 rus03 0.9 0.1 rus03 265.10 1.50 2.3 pbd+03 31.70 2.70 pbd+03 kout hh09 1.4 8.7 53.6 0.7 8.1 33.8 265.20 1.50 3.0 pbd+03 25.10 2.70 pbd+03 kout hh09 1.5 8.8 51.9 0.8 8.1 34.1 267.80 -0.90 7.9 pbd+03 21.60 2.70 pbd+03 1.6 0.2 rus03 51.5 51.5 51.5 267.90 -1.10 1.0 pbd+03 153.30 2.70 pbd+03 1.6 0.2 rus03 99.0 99.0 99.0 268.00 -1.10 1.8 pbd+03 183.30 2.70 pbd+03 kout hh09 1.6 8.7 105.1 0.8 8.1 66.2 268.00 -1.00 1.8 pbd+03 19.40 2.70 pbd+03 kout hh09 1.6 8.7 49.7 0.8 8.1 31.3 268.00 1.80 -0.9 rus03 0.5 0.1 rus03 268.20 -2.70 13.0 rus03 2.6 0.5 rus03 268.50 -0.80 5.0 pbd+03 6.60 2.70 pbd+03 1.3 0.4 rus03 30.2 30.2 30.2 269.10 -1.10 15.0 pbd+03 8.40 2.70 pbd+03 2.6 0.8 rus03 52.0 52.0 52.0 269.50 -1.50 71.0 pbd+03 1.30 2.70 pbd+03 kout hh09 9.7 12.9 67.1 8.6 11.8 61.9 8.0 11.7 59.0 270.30 0.80 1.0 pbd+03 4.90 2.70 pbd+03 3.4 0.7 rus03 51.9 51.9 51.9 270.80 0.70 5.4 rus03 1.4 0.3 rus03 274.00 -1.10 39.0 pbd+03 32.30 2.70 pbd+03 2.7 0.8 rus03 83.5 83.5 83.5 274.70 -1.50 3.1 rus03 4.4 0.9 rus03 281.60 -1.00 2.0 pbd+03 1.10 2.70 pbd+03 kout hh09 4.3 8.7 36.9 3.6 8.1 32.8 2.8 8.4 27.7 281.80 -2.00 -5.4 rus03 4.7 1.0 rus03 282.00 -1.20 21.0 pbd+03 36.20 2.70 pbd+03 kout hh09 6.6 9.6 157.4 5.8 8.9 144.4 5.5 9.1 139.4 282.20 -1.10 -2.0 pbd+03 11.40 2.70 pbd+03 kout hh09 3.8 8.5 74.1 1.8 8.3 45.0 282.30 -1.80 -15.0 pbd+03 4.30 2.70 pbd+03 3.1 0.5 rus03 46.8 46.8 46.8 282.50 -1.20 -12.0 rus03 2.0 0.4 rus03 55.0 55.0 55.0 282.70 -1.40 -19.1 rus03 2.0 0.4 rus03 283.10 -1.00 -1.0 pbd+03 5.10 2.70 pbd+03 kout hh09 4.2 8.6 60.6 2.4 8.3 41.7 283.30 -1.00 16.0 pbd+03 6.10 2.70 pbd+03 kout hh09 6.3 9.4 84.3 5.6 8.6 77.9 5.3 8.9 75.1 283.30 -0.60 6.0 pbd+03 3.10 2.70 pbd+03 kout hh09 5.2 8.9 59.2 4.5 8.2 53.8 4.1 8.5 50.5 283.50 -1.00 -3.0 pbd+03 8.90 2.70 pbd+03 3.3 0.7 rus03 62.1 62.1 62.1 284.00 -0.90 3.8 pbd+03 16.80 2.70 pbd+03 5.5 0.25 rus03 107.9 107.9 107.9 284.10 -0.40 -16.0 pbd+03 8.50 2.70 pbd+03 ktan hh09 2.1 8.2 45.3 1.9 7.8 42.4 2.1 8.2 45.3 284.30 0.40 1.0 pbd+03 3.40 2.70 pbd+03 5.5 0.25 rus03 63.4 63.4 63.4 284.30 -0.30 -0.5 pbd+03 241.40 2.70 pbd+03 5.5 0.25 rus03 262.4 262.4 262.4 284.60 -0.50 5.0 pbd+03 1.30 2.70 pbd+03 kout hh09 5.4 8.8 45.4 4.7 8.2 41.4 4.3 8.5 39.0 284.60 -0.20 9.0 pbd+03 10.30 2.70 pbd+03 kout hh09 5.9 9.0 96.1 5.2 8.4 88.3 4.8 8.6 83.7 284.70 0.30 10.0 pbd+03 3.70 2.70 pbd+03 kout hh09 6.0 9.1 69.1 5.3 8.4 63.6 4.9 8.7 60.4 285.30 -0.10 -2.0 pbd+03 13.30 2.70 pbd+03 kout hh09 4.7 8.5 89.9 3.2 8.3 69.6 285.30 -0.00 -1.6 pbd+03 20.90 2.70 pbd+03 kout hh09 4.7 8.6 104.5 3.3 8.3 82.6 286.20 -0.20 -18.0 pbd+03 37.20 2.70 pbd+03 2.6 0.25 rus03 85.4 85.4 85.4 286.40 -1.50 38.0 pbd+03 2.20 2.70 pbd+03 kout hh09 9.2 10.6 77.2 8.3 9.8 72.1 8.0 9.9 70.3 286.40 -1.30 38.0 pbd+03 3.20 2.70 pbd+03 kout hh09 9.2 10.6 87.5 8.3 9.8 81.7 8.0 9.9 79.7 286.70 3.00 -13.0 rus03 2.1 0.6 rus03 286.90 -0.90 -20.0 pbd+03 15.00 2.70 pbd+03 2.6 0.25 rus03 63.1 63.1 63.1 287.20 -0.70 -22.4 pbd+03 15.10 2.70 pbd+03 ktan hh09 2.5 8.1 61.6 2.4 7.6 59.9 2.5 8.0 61.6 287.20 0.10 -25.0 pbd+03 6.70 2.70 pbd+03 2.6 0.25 rus03 48.2 48.2 48.2 287.20 0.40 -18.0 pbd+03 3.50 2.70 pbd+03 2.6 0.25 rus03 38.8 38.8 38.8 287.30 -0.90 -17.0 pbd+03 16.10 2.70 pbd+03 ktan hh09 2.5 8.1 62.9 2.4 7.6 61.2 2.5 8.0 62.9 287.40 -0.60 -17.7 pbd+03 147.60 2.70 pbd+03 2.6 0.25 rus03 135.1 135.1 135.1 287.50 -0.60 -19.6 pbd+03 93.80 2.70 pbd+03 2.6 0.25 rus03 116.2 116.2 116.2 287.60 -0.90 -24.0 pbd+03 29.80 2.70 pbd+03 2.6 0.25 rus03 79.3 79.3 79.3 287.70 -0.60 -26.0 pbd+03 11.10 2.70 pbd+03 ktan hh09 2.6 8.1 57.0 2.4 7.6 54.0 2.6 8.0 57.0 287.80 -0.80 -21.3 pbd+03 3.30 2.70 pbd+03 ktan hh09 2.6 8.1 38.1 2.4 7.6 36.1 2.6 8.0 38.1 287.90 -0.90 -20.7 pbd+03 5.20 2.70 pbd+03 ktan hh09 2.6 8.1 44.3 2.5 7.6 43.2 2.6 8.0 44.3 287.90 -0.80 -25.8 pbd+03 54.10 2.70 pbd+03 ktan hh09 2.6 8.1 96.7 2.5 7.6 94.2 2.6 8.0 96.7 288.00 -0.80 -26.0 pbd+03 60.60 2.70 pbd+03 2.6 0.25 rus03 100.4 100.4 100.4 288.20 -2.90 -7.4 rus03 3.1 0.9 rus03 289.10 -0.40 23.2 pbd+03 14.00 2.70 pbd+03 8.0 0.5 rus03 130.4 130.4 130.4 289.50 0.20 -23.0 rus03 2.9 0.2 rus03 289.80 -1.20 22.0 pbd+03 19.80 2.70 pbd+03 8.0 0.5 rus03 146.3 146.3 146.3 289.80 -1.10 21.9 pbd+03 45.00 2.70 pbd+03 8.0 0.5 rus03 192.4 192.4 192.4 289.90 -0.80 22.0 pbd+03 5.00 2.70 pbd+03 8.0 0.5 rus03 92.5 92.5 92.5 290.40 -2.90 -15.0 rus03 4.2 0.5 rus03 52.0 52.0 52.0 290.40 1.50 -19.0 rus03 2.7 0.25 rus03 290.50 -0.80 22.0 pbd+03 4.00 2.70 pbd+03 8.0 0.5 rus03 85.9 85.9 85.9 290.60 0.30 -28.0 pbd+03 4.00 2.70 pbd+03 2.8 0.25 rus03 42.6 42.6 42.6 291.10 -0.80 17.0 pbd+03 4.80 2.70 pbd+03 7.9 0.25 rus03 90.5 90.5 90.5 291.20 -0.30 9.0 pbd+03 5.00 2.70 pbd+03 kout hh09 7.4 9.0 87.8 6.7 8.4 82.2 6.5 8.6 80.5 291.30 -0.70 -24.5 pbd+03 95.00 2.70 pbd+03 2.7 0.2 rus03 119.6 119.6 119.6 291.50 -0.10 6.0 pbd+03 4.00 2.70 pbd+03 kout hh09 7.2 8.9 80.0 6.5 8.2 74.7 6.3 8.5 73.2 291.60 -0.50 10.0 pbd+03 238.00 2.70 pbd+03 7.9 0.25 rus03 332.4 332.4 332.4 291.90 -0.70 25.2 pbd+03 2.90 2.70 pbd+03 kout hh09 9.2 9.9 84.7 8.3 9.1 79.1 8.1 9.3 77.8 291.90 -1.00 15.0 pbd+03 6.00 2.70 pbd+03 7.9 0.25 rus03 97.5 97.5 97.5 292.30 -4.90 -3.0 rus03 3.3 1.0 rus03 18.0 18.0 18.0 292.40 1.60 -22.4 rus03 2.3 0.7 rus03 293.00 -1.00 66.0 pbd+03 2.00 2.70 pbd+03 kout hh09 13.7 13.0 97.6 12.4 11.9 91.3 12.0 11.7 89.3 293.60 -1.30 -27.0 pbd+03 5.00 2.70 pbd+03 2.5 0.5 rus03 42.6 42.6 42.6 294.80 -1.80 -18.0 pbd+03 19.30 2.70 pbd+03 2.2 0.25 rus03 61.4 61.4 61.4 295.10 -0.60 38.0 pbd+03 22.00 2.70 pbd+03 kout hh09 11.1 10.8 188.6 10.1 9.9 177.1 10.0 10.0 175.9 295.10 -1.60 -22.0 pbd+03 12.50 2.70 pbd+03 2.2 0.25 rus03 53.1 53.1 53.1 295.20 -0.60 51.1 pbd+03 20.00 2.70 pbd+03 kout hh09 12.5 11.8 197.7 11.4 10.8 185.9 11.1 10.7 182.6 295.80 -0.20 17.0 pbd+03 3.10 2.70 pbd+03 kout hh09 9.3 9.5 87.2 8.5 8.7 82.1 8.4 9.0 81.5 296.60 -1.00 25.0 pbd+03 3.00 2.70 pbd+03 kout hh09 10.2 9.9 91.7 9.3 9.2 86.2 9.2 9.3 85.6 297.00 0.00 -28.0 rus03 2.5 0.4 rus03 297.50 -0.80 23.0 pbd+03 4.00 2.70 pbd+03 kout hh09 10.2 9.8 101.0 9.3 9.1 95.0 9.3 9.3 95.0

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 19

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 297.70 -1.00 26.0 pbd+03 1.90 2.70 pbd+03 kout hh09 10.6 10.0 80.8 9.6 9.2 75.6 9.6 9.4 75.6 298.20 -0.80 16.0 pbd+03 3.00 2.70 pbd+03 kout hh09 9.8 9.4 89.3 8.9 8.7 83.7 8.9 8.9 83.7 298.20 -0.30 30.8 pbd+03 40.00 2.70 pbd+03 kout hh09 11.1 10.3 230.1 10.2 9.5 217.5 10.1 9.6 216.1 298.60 -0.10 23.0 pbd+03 13.00 2.70 pbd+03 kout hh09 10.5 9.8 152.5 9.6 9.1 143.7 9.6 9.3 143.7 298.80 -0.30 25.0 pbd+03 17.00 2.70 pbd+03 kout hh09 10.7 10.0 168.8 9.8 9.2 159.2 9.8 9.4 159.2 298.90 -0.40 24.5 pbd+03 52.00 2.70 pbd+03 kout hh09 10.7 9.9 245.1 9.8 9.2 231.2 9.7 9.3 229.6 299.00 0.10 23.0 pbd+03 2.80 2.70 pbd+03 kout hh09 10.6 9.9 92.0 9.7 9.1 86.7 9.6 9.3 86.1 299.40 -0.30 -37.0 pbd+03 0.80 2.70 pbd+03 5.4 0.6 rus03 38.6 38.6 38.6 300.50 -0.20 26.0 pbd+03 2.40 2.70 pbd+03 kout hh09 11.2 10.1 90.6 10.3 9.3 85.7 10.2 9.4 85.1 301.00 1.20 -46.8 pbd+03 3.00 2.70 pbd+03 ktan hh09 4.4 7.3 52.4 4.1 6.9 50.0 4.3 7.2 51.6 301.10 1.00 -45.1 pbd+03 4.00 2.70 pbd+03 ktan hh09 4.4 7.3 57.6 4.1 6.9 55.0 4.3 7.2 56.7 301.80 1.10 -42.0 pbd+03 4.60 2.70 pbd+03 ktan hh09 4.5 7.2 61.3 4.2 6.8 58.5 4.4 7.1 60.4 302.00 -0.00 -27.0 pbd+03 1.40 2.70 pbd+03 2.1 0.6 rus03 24.8 24.8 24.8 302.10 0.30 -24.0 rus03 2.1 0.2 rus03 302.50 -0.70 31.0 pbd+03 5.40 2.70 pbd+03 kout hh09 12.2 10.4 125.7 11.1 9.6 118.0 11.1 9.7 118.0 302.70 0.20 -33.0 pbd+03 5.50 2.70 pbd+03 2.1 0.6 rus03 39.1 39.1 39.1 302.80 1.30 -32.0 pbd+03 2.00 2.70 pbd+03 2.1 0.6 rus03 27.9 27.9 27.9 303.10 -0.90 26.0 pbd+03 3.10 2.70 pbd+03 kout hh09 11.8 10.1 102.2 10.8 9.3 96.3 10.9 9.5 96.9 303.50 -0.70 32.0 pbd+03 9.00 2.70 pbd+03 kout hh09 12.5 10.5 151.5 11.4 9.7 142.5 11.4 9.8 142.5 303.90 -0.10 26.0 pbd+03 0.30 2.70 pbd+03 kout hh09 12.0 10.1 47.4 11.0 9.3 44.7 11.0 9.5 44.7 305.20 -0.40 -45.0 pbd+03 6.00 2.70 pbd+03 ktan hh09 4.9 6.9 70.9 4.6 6.5 68.0 4.8 6.9 69.9 305.40 0.20 -38.7 pbd+03 53.30 2.70 pbd+03 kfar pdd04 6.2 7.0 171.8 5.5 6.6 158.6 5.6 7.0 160.5 305.50 0.00 -44.7 pbd+03 28.50 2.70 pbd+03 ktan hh09 4.9 6.9 119.2 4.6 6.5 114.3 4.9 6.8 119.2 305.60 -0.00 -44.9 pbd+03 29.00 2.70 pbd+03 ktan hh09 4.9 6.9 119.9 4.7 6.5 116.6 4.9 6.8 119.9 305.70 1.60 -58.0 pbd+03 5.90 2.70 pbd+03 ktan hh09 5.0 6.9 71.4 4.7 6.5 68.5 4.9 6.8 70.4 305.80 0.10 -43.0 pbd+03 5.00 2.70 pbd+03 ktan hh09 5.0 6.9 67.6 4.7 6.5 64.9 4.9 6.8 66.7 306.30 0.10 -37.0 pbd+03 2.70 2.70 pbd+03 2.3 0.25 rus03 32.8 32.8 32.8 306.32 -0.36 -16.0 ch87 2.10 5.00 ch87 kfar ch87 8.9 7.9 75.9 8.2 7.3 71.9 8.4 7.7 73.0 308.09 -0.43 -17.0 ch87 1.00 5.00 ch87 kfar ch87 9.3 7.8 61.0 8.6 7.3 57.9 8.8 7.6 58.8 308.60 0.60 -50.0 pbd+03 12.90 2.70 pbd+03 4.0 0.6 rus03 79.9 79.9 79.9 308.70 0.60 -46.4 pbd+03 21.00 2.70 pbd+03 knear pdd04 4.2 6.7 97.1 4.2 6.3 97.1 4.4 6.7 100.2 309.10 0.20 -47.0 pbd+03 4.00 2.70 pbd+03 4.0 0.6 rus03 54.1 54.1 54.1 309.50 -0.70 -43.0 pbd+03 3.00 2.70 pbd+03 4.0 0.6 rus03 49.1 49.1 49.1 309.90 0.40 -55.0 pbd+03 5.00 2.70 pbd+03 4.0 0.6 rus03 58.3 58.3 58.3 310.20 -0.10 4.0 pbd+03 6.00 2.70 pbd+03 kout hh09 11.5 8.9 125.2 10.6 8.2 118.6 10.9 8.4 120.8 311.00 0.40 -51.0 pbd+03 4.00 2.70 pbd+03 2.9 0.9 rus03 43.7 43.7 43.7 311.10 -0.30 36.0 pbd+03 3.00 2.70 pbd+03 kout hh09 14.7 11.1 117.0 13.5 10.2 110.5 13.6 10.2 111.1 311.20 0.80 -57.0 pbd+03 2.00 2.70 pbd+03 ktan hh09 5.6 6.4 53.7 5.3 6.0 51.8 5.5 6.3 53.1 311.30 -0.00 -52.0 pbd+03 5.20 2.70 pbd+03 2.9 0.9 rus03 47.6 47.6 47.6 311.50 0.40 -61.9 pbd+03 10.00 2.70 pbd+03 ktan hh09 5.6 6.4 91.9 5.3 6.0 88.6 5.6 6.3 91.9 311.60 -0.60 32.0 pbd+03 3.00 2.70 pbd+03 kout hh09 14.4 10.8 115.4 13.2 9.9 108.9 13.3 10.0 109.4 311.60 0.30 -62.3 pbd+03 4.30 2.70 pbd+03 ktan hh09 5.6 6.4 69.3 5.3 6.0 66.8 5.6 6.3 69.3 311.90 0.10 -47.2 pbd+03 28.00 2.70 pbd+03 kfar pdd04 7.7 6.6 160.1 7.1 6.2 151.7 7.5 6.6 157.3 311.90 0.20 -45.3 pbd+03 9.70 2.70 pbd+03 kfar pdd04 7.9 6.7 114.4 7.3 6.3 108.5 7.7 6.6 112.5 312.70 -0.40 -29.0 rus03 1.5 0.4 rus03 313.45 0.18 -5.0 ch87 4.30 5.00 ch87 kfar ch87 11.5 8.4 114.4 10.6 7.8 108.4 10.9 8.0 110.4 314.10 0.50 -67.0 pbd+03 5.00 2.70 pbd+03 ktan hh09 5.9 6.1 75.5 5.6 5.7 72.9 5.9 6.0 75.5 315.30 -0.30 16.0 pbd+03 1.10 2.70 pbd+03 kout hh09 13.6 9.7 79.5 12.6 8.9 75.6 12.9 9.1 76.7 316.40 -0.80 16.0 pbd+03 0.20 2.70 pbd+03 kout hh09 13.9 9.7 45.7 12.8 8.9 43.3 13.1 9.1 43.9 316.40 -0.40 3.0 pbd+03 5.00 2.70 pbd+03 kout hh09 12.7 8.8 125.9 11.8 8.2 119.9 12.1 8.4 121.9 316.80 -0.10 -36.1 pbd+03 37.30 2.70 pbd+03 knear pdd04 2.5 6.9 83.2 2.4 6.5 81.0 2.6 6.9 85.4 316.80 -0.00 -36.0 pbd+03 34.00 2.70 pbd+03 3.6 1.1 rus03 102.9 102.9 102.9 317.00 0.30 -48.8 pbd+03 17.00 2.70 pbd+03 3.6 1.1 rus03 81.7 81.7 81.7 317.30 0.20 -46.8 pbd+03 7.10 2.70 pbd+03 kfar gg76 9.2 6.5 114.1 8.6 6.1 109.1 9.1 6.4 113.3 317.30 0.30 -51.0 pbd+03 12.00 2.70 pbd+03 3.6 1.1 rus03 72.7 72.7 72.7 317.60 -0.40 -38.0 pbd+03 4.00 2.70 pbd+03 3.6 1.1 rus03 50.4 50.4 50.4 318.00 -0.80 -37.0 pbd+03 12.90 2.70 pbd+03 3.6 1.1 rus03 74.5 74.5 74.5 318.10 -0.50 3.0 pbd+03 1.10 2.70 pbd+03 kout hh09 13.1 8.8 77.6 12.1 8.2 73.6 12.5 8.4 75.2 319.20 -0.40 -24.7 pbd+03 12.30 2.70 pbd+03 kfar gg76 11.2 7.3 156.3 10.4 6.8 148.8 10.9 7.1 153.5 319.40 -0.00 -14.1 pbd+03 12.00 2.70 pbd+03 kfar gg76 12.0 7.8 162.3 11.2 7.3 155.0 11.6 7.5 158.7 319.87 0.77 -38.0 ch87 1.60 5.00 ch87 knear ch87 2.6 6.7 30.5 2.5 6.3 29.7 2.6 6.7 30.5 320.11 -0.51 -13.0 ch87 4.00 5.00 ch87 kfar ch87 12.2 7.9 116.1 11.4 7.3 111.0 11.8 7.6 113.5 320.20 0.80 -36.0 pbd+03 10.00 2.70 pbd+03 knear pdd04 2.4 6.8 52.2 2.4 6.4 52.2 2.5 6.8 53.6 320.24 0.42 -31.0 ch87 2.30 5.00 ch87 knear ch87 2.1 7.0 29.9 2.0 6.6 28.9 2.2 7.0 30.8 320.30 -0.20 -9.2 pbd+03 12.00 2.70 pbd+03 kfar gg76 12.5 8.1 166.8 11.7 7.5 159.6 12.1 7.7 163.2 320.38 0.14 -3.0 ch87 3.60 5.00 ch87 kfar ch87 13.0 8.4 117.0 12.1 7.8 111.5 12.5 8.1 114.0 320.40 -1.00 -50.0 rus03 3.3 0.25 rus03 113.0 113.0 113.0 320.71 0.20 -7.0 ch87 14.30 5.00 ch87 kfar ch87 12.8 8.2 183.3 11.9 7.6 174.6 12.3 7.8 178.5 321.00 -0.50 -61.3 pbd+03 11.10 2.70 pbd+03 knear gg76 4.1 5.9 77.3 3.9 5.5 74.8 4.0 6.0 76.0 321.10 -0.50 -55.7 pbd+03 21.00 2.70 pbd+03 knear pdd04 3.7 6.1 89.3 3.5 5.7 86.1 3.6 6.1 87.7 322.20 0.60 -51.9 pbd+03 14.00 2.70 pbd+03 knear pdd04 3.4 6.2 73.7 3.3 5.8 72.2 3.4 6.2 73.7 324.10 0.20 -91.0 pbd+03 4.30 2.70 pbd+03 ktan hh09 6.9 5.0 79.7 324.20 0.10 -89.2 pbd+03 4.80 2.70 pbd+03 knear pdd04 6.5 5.0 79.4 5.8 4.7 73.6 5.6 5.1 71.9 325.00 -0.60 25.0 pbd+03 3.50 2.70 pbd+03 kout hh09 16.7 10.9 134.1 15.4 10.0 127.0 15.6 10.0 128.1 326.20 1.00 -42.0 pbd+03 6.00 2.70 pbd+03 2.3 0.4 rus03 42.8 42.8 42.8 326.30 0.70 -45.0 pbd+03 14.00 2.70 pbd+03 2.3 0.4 rus03 56.8 56.8 56.8 326.40 0.90 -39.0 pbd+03 16.00 2.70 pbd+03 2.3 0.4 rus03 59.4 59.4 59.4 326.50 0.90 -41.3 pbd+03 9.20 2.70 pbd+03 knear gg76 2.6 6.5 53.6 2.7 6.0 55.0 2.8 6.4 56.3 326.60 0.60 -44.0 pbd+03 37.10 2.70 pbd+03 2.3 0.4 rus03 78.6 78.6 78.6 326.60 -1.00 -21.0 rus03 0.9 0.3 rus03 326.70 0.60 -44.5 pbd+03 50.00 2.70 pbd+03 knear pdd04 3.0 6.2 103.6 2.8 5.8 98.9 2.9 6.3 101.3 327.30 -0.60 -48.8 pbd+03 71.60 2.70 pbd+03 knear pdd04 3.2 6.0 121.9 3.1 5.7 119.3 3.1 6.1 119.3 327.30 -0.50 -48.0 pbd+03 54.00 2.70 pbd+03 knear pdd04 3.2 6.1 111.0 3.0 5.7 106.3 3.1 6.1 108.7

20 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 327.50 -0.80 -37.0 rus03 2.8 0.5 rus03 328.00 -0.10 -44.8 pbd+03 8.00 2.70 pbd+03 knear pdd04 3.0 6.2 56.3 2.9 5.8 55.0 3.0 6.2 56.3 328.00 -0.60 -45.6 rus03 3.0 0.4 rus03 328.10 -0.80 -18.5 rus03 1.1 0.3 rus03 328.20 -2.00 -25.0 rus03 0.8 0.2 rus03 328.30 0.40 -96.6 pbd+03 8.00 2.70 pbd+03 kfar pdd04 8.3 4.6 110.9 8.0 4.4 108.2 8.7 4.7 114.4 328.30 -0.60 -43.0 pbd+03 3.00 2.70 pbd+03 3.3 0.7 rus03 43.2 43.2 43.2 328.60 -0.50 -51.0 pbd+03 9.00 2.70 pbd+03 knear pdd04 3.4 5.9 63.6 3.2 5.5 61.1 3.3 6.0 62.3 329.40 0.10 -107. pbd+03 5.00 2.70 pbd+03 ktan hh09 7.3 4.3 87.0 330.90 -0.40 -56.1 pbd+03 13.20 2.70 pbd+03 knear pdd04 3.7 5.6 76.5 3.5 5.3 73.7 3.5 5.7 73.7 331.30 -0.30 -64.2 pbd+03 17.00 2.70 pbd+03 knear pdd04 4.1 5.3 89.1 3.9 5.0 86.2 3.9 5.4 86.2 331.50 -0.10 -88.8 pbd+03 47.00 2.70 pbd+03 kfar pdd04 9.6 4.6 220.4 9.1 4.3 212.7 9.8 4.7 223.5 332.10 -0.40 -55.0 pbd+03 12.00 2.70 pbd+03 3.8 0.5 rus03 75.4 75.4 75.4 332.15 -0.45 -55.0 ch87 14.50 5.00 ch87 knear ch87 3.7 5.5 80.5 3.4 5.2 76.1 3.5 5.6 77.6 332.50 -0.10 -53.0 pbd+03 2.50 2.70 pbd+03 3.8 0.5 rus03 44.7 44.7 44.7 332.70 -0.60 -47.4 pbd+03 52.00 2.70 pbd+03 3.8 0.5 rus03 122.9 122.9 122.9 332.80 -1.40 -41.0 pbd+03 3.50 2.70 pbd+03 3.8 0.5 rus03 50.0 50.0 50.0 332.80 -0.60 -57.1 pbd+03 16.40 2.70 pbd+03 3.8 0.5 rus03 83.7 83.7 83.7 333.00 -0.40 -53.8 pbd+03 42.20 2.70 pbd+03 kfar pdd04 11.5 5.5 239.9 10.9 5.2 231.5 11.5 5.5 239.9 333.00 0.80 -52.0 pbd+03 5.00 2.70 pbd+03 3.8 0.5 rus03 56.3 56.3 56.3 333.00 2.00 -20.0 pbd+03 6.00 2.70 pbd+03 1.7 0.2 rus03 35.0 35.0 35.0 333.10 -0.40 -54.5 pbd+03 52.00 2.70 pbd+03 3.8 0.5 rus03 122.9 122.9 122.9 333.30 -0.40 -50.1 pbd+03 60.00 2.70 pbd+03 3.8 0.5 rus03 128.9 128.9 128.9 333.60 -0.20 -47.6 pbd+03 122.00 2.70 pbd+03 knear pdd04 3.3 5.7 148.7 3.1 5.4 142.6 3.2 5.8 145.7 333.70 -0.50 -49.9 pbd+03 5.60 2.70 pbd+03 3.8 0.5 rus03 58.5 58.5 58.5 334.70 -0.70 16.0 pbd+03 1.50 2.70 pbd+03 kout hh09 17.5 10.5 104.3 16.2 9.6 99.1 16.6 9.6 100.7 335.80 -0.20 -52.1 pbd+03 9.90 2.70 pbd+03 knear gg76 3.7 5.4 69.5 3.4 5.1 65.7 3.5 5.5 67.0 336.40 -0.20 -87.2 pbd+03 35.00 2.70 pbd+03 knear pdd04 5.3 4.2 134.5 4.9 4.0 127.6 4.9 4.4 127.6 336.50 -1.50 -24.9 pbd+03 6.00 2.70 pbd+03 1.4 0.25 rus03 30.8 30.8 30.8 336.80 0.00 -79.0 pbd+03 70.00 2.70 pbd+03 kfar pdd04 10.7 4.4 270.6 10.1 4.2 260.4 10.8 4.5 272.3 336.90 -0.10 -73.1 pbd+03 20.50 2.70 pbd+03 knear gg76 4.7 4.6 103.8 4.4 4.3 99.3 4.4 4.8 99.3 337.10 -0.20 -72.8 pbd+03 30.00 2.70 pbd+03 kfar pdd04 11.0 4.5 207.8 10.4 4.3 200.2 11.1 4.6 209.1 337.60 0.00 -54.8 pbd+03 6.50 2.70 pbd+03 kfar gg76 11.8 5.1 130.8 11.2 4.8 126.3 11.8 5.1 130.8 337.90 -0.50 -40.2 pbd+03 16.00 2.70 pbd+03 knear pdd04 3.1 5.7 72.4 2.9 5.4 69.3 3.0 5.8 70.8 338.00 -0.10 -47.9 pbd+03 50.00 2.70 pbd+03 kfar gg76 12.2 5.4 264.0 11.5 5.1 253.8 12.2 5.3 264.0 338.10 -0.10 -41.7 pbd+03 7.80 2.70 pbd+03 kfar gg76 12.5 5.6 144.4 11.8 5.3 139.0 12.5 5.6 144.4 338.40 0.00 -36.9 pbd+03 49.60 2.70 pbd+03 kfar gg76 12.8 5.8 271.9 12.1 5.5 261.9 12.7 5.8 270.5 338.70 0.60 -62.0 pbd+03 4.20 2.70 pbd+03 5.2 1.6 rus03 65.5 65.5 65.5 338.90 0.60 -63.0 pbd+03 11.00 2.70 pbd+03 5.2 1.6 rus03 90.3 90.3 90.3 338.90 -0.10 -40.0 pbd+03 3.00 2.70 pbd+03 2.7 0.6 rus03 37.8 37.8 37.8 339.10 -0.40 -37.0 pbd+03 4.00 2.70 pbd+03 2.7 0.6 rus03 41.6 41.6 41.6 339.58 -0.12 -30.0 ch87 3.40 5.00 ch87 kfar ch87 13.3 6.1 116.5 12.5 5.8 111.8 13.2 6.0 115.9 340.30 -0.20 -43.2 pbd+03 9.00 2.70 pbd+03 kfar gg76 12.5 5.4 151.5 11.8 5.1 145.8 12.5 5.3 151.5 340.80 -1.00 -24.9 pbd+03 18.00 2.70 pbd+03 2.5 0.4 rus03 65.3 65.3 65.3 341.00 -0.10 -38.0 pbd+03 7.00 2.70 pbd+03 3.4 1.0 rus03 58.5 58.5 58.5 341.30 -0.30 -38.0 pbd+03 5.60 2.70 pbd+03 3.4 1.0 rus03 54.3 54.3 54.3 341.96 0.20 -8.0 ch87 2.80 5.00 ch87 kfar ch87 15.3 7.7 119.9 14.3 7.2 114.6 14.9 7.3 117.8 343.50 -0.00 -30.2 pbd+03 15.00 2.70 pbd+03 kfar gg76 13.3 5.7 187.2 12.6 5.4 180.6 13.2 5.6 186.3 343.90 -4.70 rus03 2.0 0.6 rus03 345.00 1.50 -14.8 pbd+03 91.00 2.70 pbd+03 1.9 0.25 rus03 93.3 93.3 93.3 345.20 1.00 -9.2 pbd+03 23.10 2.70 pbd+03 1.9 0.25 rus03 59.1 59.1 59.1 345.30 1.50 -15.3 pbd+03 17.10 2.70 pbd+03 1.9 0.25 rus03 53.4 53.4 53.4 345.40 -0.90 -23.0 pbd+03 33.00 2.70 pbd+03 knear pdd04 2.6 6.0 82.0 2.5 5.7 79.9 2.5 6.1 79.9 345.40 1.40 -14.8 pbd+03 42.80 2.70 pbd+03 1.9 0.25 rus03 72.6 72.6 72.6 345.49 0.31 -22.3 swa+04 2.47 4.86 swa+04 knear swa+04 2.6 6.1 35.2 2.4 5.7 33.4 2.5 6.1 34.3 345.50 0.30 -20.0 pbd+03 4.70 2.70 pbd+03 2.0 0.25 rus03 36.0 36.0 36.0 345.50 0.20 -13.0 pbd+03 2.10 2.70 pbd+03 1.9 0.25 rus03 26.6 26.6 26.6 345.55 -0.04 -6.0 ch87 16.00 5.00 ch87 kfar ch87 15.7 7.7 218.1 14.7 7.2 208.7 15.3 7.4 214.4 345.83 0.04 -10.0 ch87 2.10 5.00 ch87 kfar ch87 15.2 7.2 108.5 14.2 6.7 103.7 14.9 6.9 107.1 346.50 0.10 2.0 pbd+03 1.00 2.70 pbd+03 kout hh09 17.0 9.0 89.4 15.9 8.3 85.5 16.4 8.4 87.3 347.70 1.90 -19.0 rus03 2.0 0.6 rus03 348.20 -1.00 -18.0 pbd+03 12.60 2.70 pbd+03 2.9 0.25 rus03 64.0 64.0 64.0 348.20 0.40 -12.0 rus03 8.30 5.00 ch87 1.3 0.4 rus03 knear ch87 1.8 6.7 33.3 33.3 33.3 348.23 -0.97 -17.9 swa+04 7.95 4.86 swa+04 kfar swa+04 14.2 6.1 161.4 13.3 5.7 154.5 14.0 6.0 159.9 348.60 -0.60 -19.0 pbd+03 17.60 2.70 pbd+03 2.9 0.25 rus03 71.5 71.5 71.5 348.70 -1.00 -12.6 pbd+03 39.20 2.70 pbd+03 2.9 0.25 rus03 93.4 93.4 93.4 349.80 -0.60 -25.8 pbd+03 10.40 2.70 pbd+03 2.2 0.3 rus03 knear gg76 3.5 5.1 49.9 49.9 49.9 349.83 -0.53 -25.7 swa+04 3.50 4.86 swa+04 2.2 0.3 rus03 knear swa+04 3.5 5.1 35.4 35.4 35.4 350.00 0.20 -5.0 rus03 1.6 0.5 rus03 350.50 1.00 -10.9 pbd+03 4.00 2.70 pbd+03 1.9 0.2 rus03 32.9 32.9 32.9 351.00 0.70 pbd+03 50.00 2.70 pbd+03 1.9 0.2 rus03 76.4 76.4 76.4 351.20 0.50 -7.1 pbd+03 21.00 2.70 pbd+03 1.9 0.2 rus03 57.2 57.2 57.2 351.40 0.70 -3.1 pbd+03 176.00 2.70 pbd+03 1.9 0.2 rus03 116.3 116.3 116.3 351.40 0.60 pbd+03 190.00 2.70 pbd+03 1.9 0.2 rus03 119.3 119.3 119.3 351.60 -1.30 -14.0 pbd+03 35.30 2.70 pbd+03 knear pdd04 2.6 5.9 83.9 2.5 5.6 81.7 2.5 6.0 81.7 351.70 -1.20 -13.0 pbd+03 43.00 2.70 pbd+03 knear gg76 2.5 6.0 87.3 2.4 5.7 85.0 2.4 6.1 85.0 351.70 0.50 -2.3 pbd+03 2.40 2.70 pbd+03 1.9 0.2 rus03 27.8 27.8 27.8 352.40 2.10 -7.0 rus03 1.0 0.2 rus03 40.0 40.0 40.0 352.80 1.30 1.4 pbd+03 14.90 2.70 pbd+03 kout hh09 17.5 9.1 224.3 16.3 8.4 213.9 16.8 8.4 218.3 353.00 0.90 -4.0 pbd+03 37.20 2.70 pbd+03 2.0 0.25 rus03 71.7 71.7 71.7 353.10 0.40 -3.3 pbd+03 56.70 2.70 pbd+03 2.0 0.25 rus03 82.5 82.5 82.5 353.10 0.70 -3.8 pbd+03 269.00 2.70 pbd+03 2.0 0.25 rus03 138.6 138.6 138.6 353.20 0.90 -4.4 pbd+03 145.20 2.70 pbd+03 2.0 0.25 rus03 112.8 112.8 112.8

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 21

Table A.1. continued.

l b V_{lsr} Re f. S Freq Re f. d d_{erro} Re f. Mark Re f. D_{8.5} R_{8.5} U_{8.5} D_{8.0} R_{8.0} U_{8.0} D_{8.4} R_{8.4} U_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20) (21) 353.42 -0.37 -16.1 tlhj08 7.00 2.70 pbd+03 knear tlhj08 3.4 5.2 58.1 3.1 4.9 56.3 3.2 4.8 56.9 355.10 20.90 4.5 rus03 0.2 0.04 rus03 355.60 0.80 6.5 rus03 1.2 0.25 rus03 359.50 -0.60 18.0 rus03 1.5 0.2 rus03 20.0 1.5 6.5 20.0 20.0

22 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.2. GMCs as tracers of spiral arms. Columns 1 and 2 are the Galactic longitude and latitude; Column 3 to 6 list velocity, the luminosity of CO emission line (in unit of 10^3 K km s^{−1} pc^2), distance and mass of molecular cloud, which were all taken from the reference given in Column 8; Column 7 is the note for distance ambiguity given in this reference, used as the same convention as in Table A1; Columns 9 and 10 list the distances to the Sun and to the Galactic center, which are estimated by the velocity and the rotation curve with R_0 = 8.5 kpc and Θ_0 = 220 km s^{−1} when the stellar distance is unavailable; Column 11 gives the mass of molecular clouds re-scaled by the newly estimated distance; Columns 12, 13 and 14 are the same as Columns 9-11 but with R_0 = 8.0 kpc and Θ_0 = 220 km s^{−1}. Columns 15, 16 and 17 are the same as Columns 9-11 but with R_0 = 8.4 kpc and Θ_0 = 254 km s^{−1}. References: bw94: Brand & Wouterloot (1994); css90: Carpenter et al. (1990); dect86: Dame et al. (1986); dbt90: Digel et al. (1990); dgt94: Digel et al. (1994); dlp+96: Digel et al. (1996); dkm+08: Dawson et al. (2008); gcbt88: Grabelsky et al. (1988); hcs01: Heyer et al. (2001); mk88: Mead & Kutner (1988); mab97: May et al. (1997); nomf05: Nakagawa et al. (2005); sod91: Sodroski (1991); srby87: Solomon et al. (1987); tllw07: Tian et al. (2007).

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (^o ) (^o) km/s 10^3 Kkms^{−1} pc^2 kpc 10^5 M_⊙ kpc kpc 10^5 M_⊙ kpc kpc 10^5 M_⊙ kpc kpc 10^5 M_⊙ (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 8.00 -0.50 128.00 72.70 10.10 4.435 ktan srby87 8.20 0.20 20.00 1402.00 15.90 85.522 kfar srby87 13.4 5.2 60.74 12.7 4.9 54.56 13.4 5.2 60.74 8.30 -0.10 48.00 50.20 13.20 3.062 kfar srby87 11.5 3.3 2.32 10.9 3.2 2.09 11.6 3.4 2.36 8.30 -0.30 16.00 28.10 3.20 1.714 knear srby87 2.9 5.6 1.41 2.7 5.3 1.22 2.8 5.8 1.31 8.40 -0.30 37.00 233.00 5.70 14.213 knear srby87 4.7 3.9 9.66 4.4 3.7 8.47 4.4 4.1 8.47 8.50 -1.00 16.00 106.00 3.20 6.466 knear srby87 2.9 5.7 5.31 2.7 5.4 4.60 2.7 5.8 4.60 8.70 0.60 22.00 8.60 4.00 0.525 knear srby87 3.5 5.1 0.40 3.2 4.8 0.34 3.3 5.3 0.36 9.30 0.70 15.00 2.00 2.80 0.122 knear srby87 2.6 6.0 0.11 2.4 5.6 0.09 2.4 6.1 0.09 9.30 0.00 31.00 15.60 4.80 0.952 knear srby87 4.1 4.5 0.69 3.8 4.3 0.60 3.9 4.7 0.63 9.60 0.80 26.00 53.90 4.20 3.288 knear srby87 3.6 4.9 2.42 3.4 4.7 2.15 3.4 5.1 2.15 9.80 -0.75 28.00 18.30 4.40 1.116 knear srby87 3.8 4.8 0.83 3.5 4.6 0.71 3.6 5.0 0.75 10.00 -0.04 32.00 18.30 4.70 1.116 knear srby87 4.0 4.6 0.81 3.7 4.4 0.69 3.8 4.8 0.73 10.80 -0.80 29.00 38.00 4.20 2.318 knear srby87 3.7 5.0 1.80 3.4 4.7 1.52 3.5 5.1 1.61 11.10 -0.50 34.00 578.00 4.80 35.258 kfar srby87 12.7 4.7 246.82 12.0 4.4 220.36 12.8 4.7 250.72 11.40 -0.30 49.00 17.90 6.10 1.092 knear srby87 4.8 3.9 0.68 4.4 3.8 0.57 4.5 4.2 0.59 11.60 -0.40 32.00 16.70 4.30 1.019 knear srby87 3.7 4.9 0.75 3.5 4.6 0.68 3.5 5.1 0.68 11.70 -0.30 47.00 12.30 5.60 0.750 knear srby87 4.6 4.1 0.51 4.3 3.9 0.44 4.3 4.3 0.44 11.90 0.80 26.00 22.40 3.60 1.366 knear srby87 3.2 5.4 1.08 3.0 5.1 0.95 3.0 5.6 0.95 11.90 -0.10 42.00 84.60 14.40 5.161 kfar srby87 12.3 4.4 3.77 11.6 4.2 3.35 12.4 4.4 3.83 12.00 -0.60 35.00 29.50 4.50 1.799 knear srby87 3.9 4.8 1.35 3.6 4.5 1.15 3.7 5.0 1.22 12.20 -0.10 23.00 83.00 16.30 5.063 kfar srby87 13.7 5.7 3.58 12.9 5.4 3.17 13.6 5.6 3.52 12.40 -0.70 25.00 3.20 3.40 0.195 knear srby87 3.1 5.5 0.16 2.9 5.2 0.14 2.9 5.7 0.14 12.70 0.70 18.00 28.10 2.50 1.714 knear srby87 2.4 6.2 1.58 2.2 5.8 1.33 2.3 6.3 1.45 12.70 -0.10 56.00 45.70 13.60 2.788 kfar srby87 11.7 3.9 2.06 11.1 3.7 1.86 11.8 4.0 2.10 12.80 -0.20 32.00 278.00 4.10 16.958 knear srby87 3.5 5.1 12.36 3.3 4.8 10.99 3.3 5.3 10.99 12.90 0.50 35.00 10.50 4.30 0.640 knear srby87 3.7 4.9 0.47 3.5 4.7 0.42 3.5 5.1 0.42 13.00 0.40 32.00 35.30 4.00 2.153 knear srby87 3.5 5.1 1.65 3.3 4.9 1.47 3.3 5.3 1.47 13.00 -0.10 47.00 140.00 5.30 8.540 knear srby87 4.4 4.3 5.89 4.1 4.1 5.11 4.2 4.5 5.36 13.70 -0.10 48.00 31.60 5.20 1.928 knear srby87 4.4 4.4 1.38 4.1 4.2 1.20 4.1 4.6 1.20 13.90 0.90 27.00 13.20 3.30 0.805 knear srby87 3.0 5.6 0.67 2.8 5.3 0.58 2.9 5.8 0.62 13.90 0.30 49.00 47.20 5.20 2.879 knear srby87 4.4 4.4 2.06 4.1 4.2 1.79 4.1 4.6 1.79 14.00 -0.10 26.00 7.60 3.20 0.464 knear srby87 2.9 5.7 0.38 2.7 5.4 0.33 2.8 5.8 0.36 14.00 -0.60 18.00 195.00 2.40 11.895 knear srby87 2.2 6.4 10.00 2.1 6.0 9.11 2.2 6.4 10.00 14.20 -0.20 39.00 297.00 4.40 18.117 knear srby87 3.8 4.9 13.51 3.5 4.6 11.46 3.6 5.1 12.13 14.60 -0.60 37.00 17.90 4.20 1.092 knear srby87 3.6 5.1 0.80 3.4 4.8 0.72 3.4 5.2 0.72 15.00 -0.70 20.00 25.10 2.50 1.531 knear srby87 2.3 6.3 1.30 2.2 5.9 1.19 2.2 6.4 1.19 15.00 0.00 25.00 3.50 3.00 0.213 knear srby87 2.7 5.9 0.17 2.6 5.6 0.16 2.6 6.0 0.16 15.10 0.90 43.00 4.80 4.60 0.293 knear srby87 3.9 4.8 0.21 3.7 4.6 0.19 3.7 5.0 0.19 15.30 0.00 32.00 18.10 3.60 1.104 knear srby87 3.2 5.5 0.87 3.0 5.2 0.77 3.1 5.6 0.82 15.70 -0.20 57.00 13.20 5.40 0.805 knear srby87 4.6 4.3 0.58 4.2 4.1 0.49 4.3 4.5 0.51 15.80 -0.60 48.00 18.30 4.80 1.116 knear srby87 4.1 4.7 0.81 3.8 4.4 0.70 3.9 4.9 0.74 15.90 -0.60 19.00 16.00 2.20 0.976 knear srby87 2.1 6.5 0.89 2.0 6.1 0.81 2.1 6.5 0.89 15.90 0.30 19.00 4.20 2.20 0.256 knear srby87 2.1 6.5 0.23 2.0 6.1 0.21 2.1 6.5 0.23 15.90 -1.00 58.00 7.30 5.50 0.445 knear srby87 4.6 4.3 0.31 4.3 4.1 0.27 4.3 4.5 0.27 16.20 -0.80 56.00 3.20 5.30 0.195 knear srby87 4.5 4.4 0.14 4.1 4.2 0.12 4.2 4.6 0.12 16.25 -0.05 48.00 143.00 14.50 8.723 kfar srby87 12.3 4.7 6.28 11.6 4.5 5.58 12.3 4.8 6.28 16.30 0.40 28.00 16.10 3.10 0.982 knear srby87 2.8 5.8 0.80 2.7 5.5 0.74 2.7 6.0 0.74 16.50 0.40 38.00 53.60 3.90 3.270 knear srby87 3.5 5.3 2.63 3.2 5.0 2.20 3.3 5.4 2.34 16.65 -0.05 59.00 49.80 5.40 3.038 knear srby87 4.6 4.3 2.20 4.2 4.1 1.84 4.3 4.6 1.93 16.70 -0.45 43.00 66.00 4.30 4.026 knear srby87 3.7 5.0 2.98 3.5 4.8 2.67 3.5 5.2 2.67 16.80 0.40 22.00 2.00 6.166 stel dect86 6.17 6.17 6.17 16.80 0.10 30.00 284.00 15.90 17.324 kfar srby87 13.4 5.8 12.30 12.6 5.4 10.88 13.3 5.7 12.12 16.90 0.30 24.00 97.30 2.60 5.935 knear srby87 2.5 6.2 5.49 2.3 5.8 4.64 2.4 6.3 5.06 17.20 -0.20 43.00 910.00 14.90 55.510 kfar srby87 12.5 5.1 39.07 11.8 4.8 34.81 12.6 5.1 39.70 17.30 -0.90 46.00 5.30 4.40 0.323 knear srby87 3.8 5.0 0.24 3.6 4.7 0.22 3.6 5.1 0.22 17.70 0.30 22.00 9.90 2.40 0.604 knear srby87 2.2 6.4 0.51 2.1 6.0 0.46 2.2 6.5 0.51 17.70 0.10 41.00 51.00 15.10 3.111 kfar srby87 12.7 5.2 2.20 11.9 5.0 1.93 12.7 5.2 2.20 18.15 -0.30 54.00 245.00 4.90 14.945 knear srby87 4.2 4.7 10.98 3.9 4.5 9.47 3.9 4.9 9.47 18.65 0.30 21.00 63.50 16.80 3.873 kfar srby87 14.0 6.6 2.69 13.2 6.2 2.39 13.9 6.4 2.65 18.85 0.05 50.00 330.00 14.40 20.130 kfar srby87 12.2 5.0 14.45 11.5 4.7 12.84 12.2 5.0 14.45 18.85 -0.50 66.00 576.00 5.60 35.136 knear srby87 4.7 4.4 24.75 4.3 4.2 20.72 4.4 4.6 21.69 19.20 -0.30 33.00 272.00 15.70 16.592 kfar srby87 13.2 5.8 11.73 12.4 5.5 10.35 13.1 5.8 11.55 19.25 0.05 26.00 7.70 2.60 0.470 knear srby87 2.4 6.3 0.40 2.3 5.9 0.37 2.3 6.3 0.37 19.50 0.00 26.00 2.20 0.891 stel dect86 0.89 0.89 0.89 19.60 -0.05 58.00 13.70 4.90 0.836 knear srby87 4.2 4.7 0.61 3.9 4.5 0.53 4.0 4.9 0.56 19.65 -0.65 55.00 14.60 4.80 0.891 knear srby87 4.1 4.8 0.65 3.8 4.6 0.56 3.9 5.0 0.59 19.70 0.10 26.00 218.00 16.30 13.298 kfar srby87 13.6 6.3 9.26 12.8 5.9 8.20 13.5 6.2 9.12 19.80 -0.45 69.00 153.00 5.60 9.333 knear srby87 4.7 4.4 6.57 4.4 4.2 5.76 4.4 4.6 5.76 19.90 -0.55 44.00 111.00 4.00 6.771 knear srby87 3.5 5.3 5.18 3.3 5.0 4.61 3.3 5.5 4.61 20.55 -0.45 67.00 108.00 13.30 6.588 kfar srby87 11.3 4.5 4.76 10.7 4.3 4.26 11.4 4.6 4.84 20.70 -0.30 63.00 72.70 13.60 4.435 kfar srby87 11.5 4.7 3.17 10.9 4.4 2.85 11.6 4.7 3.23

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 23

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 20.75 -0.10 59.00 168.00 13.80 10.248 kfar srby87 11.7 4.8 7.37 11.0 4.6 6.51 11.8 4.8 7.49 20.75 0.10 77.00 31.60 6.00 1.928 knear srby87 5.0 4.2 1.34 4.6 4.0 1.13 4.7 4.5 1.18 20.85 0.00 30.00 262.00 15.90 15.982 kfar srby87 13.3 6.2 11.18 12.5 5.8 9.88 13.2 6.1 11.02 20.90 -0.30 68.00 31.60 5.40 1.928 knear srby87 4.6 4.5 1.40 4.3 4.3 1.22 4.3 4.7 1.22 21.35 0.35 8.00 3.00 0.80 0.183 knear srby87 0.7 7.8 0.14 0.8 7.3 0.18 0.9 7.7 0.23 21.40 -0.65 55.00 87.50 4.60 5.337 knear srby87 4.0 5.0 4.04 3.7 4.7 3.45 3.8 5.2 3.64 21.40 0.00 75.00 153.00 12.80 9.333 kfar srby87 11.0 4.3 6.89 10.4 4.1 6.16 11.1 4.4 7.02 21.50 0.25 77.00 5.50 5.90 0.335 knear srby87 5.0 4.3 0.24 4.6 4.1 0.20 4.6 4.5 0.20 21.75 0.00 67.00 46.20 5.30 2.818 knear srby87 4.5 4.6 2.03 4.2 4.4 1.77 4.2 4.8 1.77 21.90 -0.35 82.00 409.00 12.40 24.949 kfar srby87 10.6 4.2 18.23 10.1 4.0 16.55 10.8 4.3 18.93 22.05 0.20 50.00 70.90 4.20 4.325 knear srby87 3.7 5.3 3.36 3.4 5.0 2.83 3.5 5.4 3.00 22.10 -0.20 53.00 4.40 11.482 knear dect86 3.8 5.2 8.56 3.6 4.9 7.69 3.6 5.3 7.69 22.35 0.10 85.00 71.70 12.20 4.374 kfar srby87 10.5 4.2 3.24 10.0 4.0 2.94 10.6 4.3 3.30 22.40 0.30 84.00 53.00 12.20 3.233 kfar srby87 10.5 4.2 2.39 10.0 4.0 2.17 10.7 4.3 2.49 22.55 -0.05 115.00 23.20 8.50 1.415 ktan srby87 22.55 -0.20 77.00 64.80 12.60 3.953 kfar srby87 10.8 4.4 2.90 10.2 4.2 2.59 10.9 4.5 2.96 22.75 -0.25 109.00 40.30 9.20 2.458 ktan srby87 22.80 0.40 92.00 90.50 11.70 5.520 kfar srby87 10.2 4.0 4.20 9.7 3.9 3.79 10.4 4.1 4.36 22.85 0.40 114.00 8.10 8.40 0.494 ktan srby87 23.00 -0.10 78.00 5.90 11.220 knear dect86 4.9 4.4 7.74 4.6 4.2 6.82 4.6 4.6 6.82 23.00 -0.10 78.00 12.60 51.286 kfar dect86 10.7 4.4 36.98 10.2 4.2 33.61 10.9 4.5 38.38 23.00 -0.40 74.00 2901.00 12.80 176.961 kfar srby87 10.9 4.5 128.32 10.3 4.3 114.59 11.0 4.6 130.69 23.00 0.00 81.00 202.00 12.40 12.322 kfar srby87 10.6 4.3 9.00 10.1 4.1 8.17 10.8 4.4 9.35 23.10 0.60 38.00 3.30 3.20 0.201 knear srby87 2.9 5.9 0.17 2.8 5.6 0.15 2.8 6.0 0.15 23.30 -0.30 64.00 4.00 0.450 knear tllw07 4.3 4.9 0.52 4.0 4.6 0.45 4.0 5.0 0.45 23.40 -0.25 102.00 258.00 11.00 15.738 ktan srby87 23.50 -0.40 73.00 21.80 5.50 1.330 knear srby87 4.7 4.6 0.97 4.3 4.4 0.81 4.4 4.8 0.85 23.55 0.20 82.00 280.00 12.30 17.080 kfar srby87 10.5 4.3 12.45 10.0 4.1 11.29 10.7 4.4 12.93 23.70 0.50 82.00 9.70 6.10 0.592 knear srby87 5.1 4.4 0.41 4.7 4.2 0.35 4.7 4.6 0.35 23.80 0.10 98.00 7.10 28.840 knear dect86 5.8 4.0 19.25 5.3 3.8 16.07 5.3 4.2 16.07 23.95 0.15 79.00 15.00 5.80 0.915 knear srby87 4.9 4.5 0.65 4.6 4.2 0.58 4.6 4.7 0.58 24.20 -0.05 88.00 90.70 11.90 5.533 kfar srby87 10.2 4.2 4.07 9.7 4.1 3.68 10.4 4.4 4.23 24.40 -0.25 60.00 111.00 13.60 6.771 kfar srby87 11.4 5.1 4.76 10.8 4.8 4.27 11.5 5.1 4.84 24.45 -0.80 56.00 4.80 4.30 0.293 knear srby87 3.9 5.2 0.24 3.6 5.0 0.21 3.7 5.4 0.22 24.45 0.25 120.00 1095.00 9.10 66.795 ktan srby87 24.45 -0.50 44.00 98.50 3.50 6.008 knear srby87 3.2 5.7 5.02 3.0 5.4 4.41 3.1 5.8 4.71 24.50 0.20 38.00 78.20 15.10 4.770 kfar srby87 12.6 6.0 3.32 11.9 5.7 2.96 12.5 5.9 3.27 24.50 -0.15 44.00 21.50 3.50 1.311 knear srby87 3.2 5.7 1.10 3.0 5.4 0.96 3.1 5.8 1.03 24.50 -0.70 47.00 11.80 3.70 0.720 knear srby87 3.4 5.6 0.61 3.2 5.3 0.54 3.2 5.7 0.54 24.50 -0.25 101.00 157.00 10.90 9.577 kfar srby87 9.6 4.0 7.43 9.1 3.8 6.68 9.9 4.1 7.90 24.55 -0.50 61.00 35.00 4.80 2.135 knear srby87 4.1 5.1 1.56 3.8 4.8 1.34 3.9 5.2 1.41 24.60 -0.15 83.00 212.00 12.10 12.932 kfar srby87 10.4 4.4 9.55 9.8 4.2 8.48 10.5 4.5 9.74 24.65 -0.10 114.00 63.40 9.10 3.867 ktan srby87 25.20 0.15 105.00 85.90 9.10 5.240 ktan srby87 25.25 0.30 47.00 161.00 14.40 9.821 kfar srby87 12.0 5.7 6.82 11.3 5.3 6.05 12.0 5.6 6.82 25.30 -0.50 55.00 13.90 47.863 kfar dect86 11.6 5.3 33.33 10.9 5.0 29.43 11.6 5.4 33.33 25.45 -0.20 65.00 620.00 13.20 37.820 kfar srby87 11.1 5.0 26.74 10.5 4.7 23.93 11.2 5.1 27.23 25.45 -0.20 120.00 32.20 9.00 1.964 ktan srby87 25.55 -0.40 116.00 10.40 9.00 0.634 ktan srby87 25.65 -0.10 94.00 793.00 11.50 48.373 kfar srby87 9.7 4.2 34.42 9.3 4.0 31.64 10.0 4.3 36.58 25.70 -0.15 109.00 133.00 9.00 8.113 ktan srby87 25.80 0.45 48.00 34.70 3.70 2.117 knear srby87 3.4 5.7 1.79 3.2 5.3 1.58 3.2 5.8 1.58 25.80 0.25 109.00 347.00 9.00 21.167 ktan srby87 25.90 0.20 69.00 4.50 5.10 0.274 knear srby87 4.4 4.9 0.20 4.1 4.7 0.18 4.2 5.1 0.19 25.90 -0.15 107.00 273.00 9.00 16.653 ktan srby87 25.95 -0.60 63.00 9.40 4.70 0.573 knear srby87 4.1 5.1 0.44 3.9 4.8 0.39 3.9 5.3 0.39 26.20 0.10 71.00 17.30 5.20 1.055 knear srby87 4.5 4.9 0.79 4.2 4.6 0.69 4.2 5.1 0.69 26.35 0.80 47.00 5.30 3.60 0.323 knear srby87 3.3 5.7 0.27 3.1 5.4 0.24 3.2 5.8 0.26 26.50 -0.60 67.00 93.50 4.90 5.703 knear srby87 4.3 5.0 4.39 4.0 4.8 3.80 4.1 5.2 3.99 26.55 -0.30 108.00 39.50 8.90 2.409 ktan srby87 26.60 0.00 26.00 186.00 15.80 11.346 kfar srby87 13.2 6.8 7.92 12.4 6.3 6.99 13.0 6.6 7.68 26.65 0.00 100.00 222.00 9.60 13.542 ktan srby87 26.65 0.00 112.00 23.90 8.90 1.458 ktan srby87 26.70 0.50 86.00 13.40 6.20 0.817 knear srby87 5.2 4.5 0.57 4.8 4.3 0.49 4.8 4.7 0.49 26.90 0.10 91.00 44.40 6.50 2.708 knear srby87 5.5 4.4 1.94 5.0 4.2 1.60 5.1 4.6 1.67 26.95 -0.40 69.00 5.70 5.00 0.348 knear srby87 4.4 5.0 0.27 4.1 4.7 0.23 4.1 5.2 0.23 26.95 -0.10 81.00 22.10 5.80 1.348 knear srby87 5.0 4.6 1.00 4.6 4.4 0.85 4.6 4.8 0.85 27.05 -0.15 101.00 21.50 8.90 1.311 ktan srby87 27.25 0.15 33.00 148.00 15.20 9.028 kfar srby87 12.7 6.4 6.30 11.9 6.0 5.53 12.5 6.3 6.11 27.30 -0.30 72.00 14.50 5.20 0.884 knear srby87 4.5 4.9 0.66 4.2 4.7 0.58 4.3 5.1 0.60 27.35 -0.15 93.00 18.00 6.60 1.098 knear srby87 5.6 4.4 0.79 5.1 4.2 0.66 5.1 4.6 0.66 27.50 0.20 36.00 46.10 15.00 2.812 kfar srby87 12.5 6.3 1.95 11.7 5.9 1.71 12.4 6.2 1.92 27.50 0.15 95.00 167.00 10.90 10.187 kfar srby87 9.4 4.3 7.58 9.0 4.1 6.95 9.7 4.5 8.07 27.65 0.10 83.00 32.10 5.90 1.958 knear srby87 5.1 4.6 1.46 4.7 4.4 1.24 4.7 4.8 1.24 27.75 0.10 101.00 141.00 8.90 8.601 ktan srby87 28.20 -0.05 95.00 150.00 10.80 9.150 kfar srby87 9.3 4.4 6.78 8.8 4.2 6.07 9.6 4.5 7.23 28.30 -0.35 47.00 18.60 3.50 1.135 knear srby87 3.2 5.9 0.95 3.0 5.5 0.83 3.1 6.0 0.89 28.30 -0.10 81.00 186.00 5.80 11.346 knear srby87 5.0 4.7 8.43 4.6 4.5 7.14 4.6 4.9 7.14 28.60 0.05 100.00 141.00 8.80 8.601 ktan srby87 28.60 0.20 79.00 68.10 11.90 4.154 kfar srby87 10.0 4.8 2.93 9.5 4.6 2.65 10.2 4.9 3.05 28.80 -0.10 80.00 5.70 21.380 knear dect86 4.9 4.8 15.80 4.6 4.6 13.92 4.6 5.0 13.92 28.85 -0.25 88.00 94.40 6.30 5.758 knear srby87 5.4 4.6 4.23 4.9 4.4 3.48 4.9 4.8 3.48 28.95 -0.65 51.00 7.60 3.80 0.464 knear srby87 3.4 5.7 0.37 3.2 5.4 0.33 3.3 5.8 0.35

24 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 29.00 0.05 98.00 255.00 8.80 15.555 ktan srby87 29.10 -0.30 94.00 223.00 7.10 13.603 knear srby87 5.7 4.5 8.77 5.2 4.3 7.30 5.2 4.7 7.30 29.35 -0.45 77.00 141.00 5.40 8.601 knear srby87 4.8 4.9 6.80 4.4 4.7 5.71 4.5 5.1 5.97 29.35 -0.55 64.00 25.70 4.60 1.568 knear srby87 4.1 5.3 1.25 3.8 5.0 1.07 3.9 5.5 1.13 29.55 0.20 79.00 87.40 5.60 5.331 knear srby87 4.9 4.9 4.08 4.5 4.6 3.44 4.6 5.1 3.60 29.60 -0.60 75.00 274.00 12.10 16.714 kfar srby87 10.1 5.0 11.65 9.6 4.7 10.52 10.2 5.1 11.88 29.85 -0.05 100.00 350.00 8.70 21.350 ktan srby87 29.90 0.10 40.00 44.00 14.40 2.684 kfar srby87 12.0 6.2 1.86 11.2 5.9 1.62 11.9 6.2 1.83 29.90 -0.80 83.00 17.50 5.90 1.067 knear srby87 5.1 4.8 0.80 4.7 4.6 0.68 4.8 5.0 0.71 30.30 -0.25 105.00 265.00 8.60 16.165 ktan srby87 30.40 0.45 45.00 2.00 3.30 0.122 knear srby87 3.1 6.1 0.11 2.9 5.7 0.09 3.0 6.1 0.10 30.55 0.35 95.00 79.40 8.60 4.843 ktan srby87 30.60 -0.05 43.00 321.00 14.10 19.581 kfar srby87 11.7 6.2 13.48 11.0 5.8 11.92 11.6 6.1 13.25 30.60 -0.45 94.00 75.70 10.30 4.618 kfar srby87 8.8 4.6 3.37 8.4 4.4 3.07 9.1 4.7 3.60 30.60 -0.10 115.00 56.90 8.60 3.471 ktan srby87 7.3 4.3 2.50 6.9 4.1 2.23 30.80 -0.05 92.00 766.00 6.80 46.726 knear srby87 5.7 4.6 32.83 5.2 4.4 27.32 5.2 4.8 27.32 30.85 -0.15 53.00 8.20 3.90 0.500 knear srby87 3.5 5.8 0.40 3.3 5.4 0.36 3.3 5.9 0.36 30.90 -0.60 102.00 13.10 8.60 0.799 ktan srby87 30.95 0.10 40.00 237.00 14.20 14.457 kfar srby87 11.8 6.3 9.98 11.1 5.9 8.83 11.7 6.2 9.81 30.95 0.40 77.00 29.70 5.50 1.812 knear srby87 4.8 5.0 1.38 4.5 4.8 1.21 4.5 5.2 1.21 31.00 0.00 48.00 13.70 28.184 kfar dect86 11.4 6.0 19.52 10.7 5.6 17.19 11.3 5.9 19.17 31.30 0.00 79.00 41.90 5.60 2.556 knear srby87 4.9 5.0 1.96 4.6 4.7 1.72 4.6 5.2 1.72 31.40 0.00 39.00 514.00 14.20 31.354 kfar srby87 11.8 6.4 21.65 11.1 6.0 19.16 11.7 6.3 21.29 31.40 -0.25 88.00 30.20 10.70 1.842 kfar srby87 9.0 4.8 1.30 8.6 4.5 1.19 9.3 4.9 1.39 31.45 0.05 104.00 102.00 8.50 6.222 ktan srby87 7.3 4.4 4.59 31.95 -0.30 97.00 49.30 8.50 3.007 ktan srby87 32.00 0.00 98.00 166.00 8.50 10.126 ktan srby87 32.45 0.20 51.00 34.30 13.30 2.092 kfar srby87 11.0 5.9 1.43 10.3 5.6 1.25 10.9 5.9 1.41 32.60 -0.25 90.00 565.00 10.30 34.465 kfar srby87 8.6 4.8 24.03 8.2 4.6 21.84 8.9 4.9 25.73 33.35 -0.55 92.00 36.50 8.40 2.226 ktan srby87 33.40 0.00 75.00 167.00 11.40 10.187 kfar srby87 9.4 5.2 6.93 8.9 4.9 6.21 9.6 5.3 7.22 33.45 -0.10 87.00 191.00 10.30 11.651 kfar srby87 8.6 4.9 8.12 8.2 4.7 7.38 8.9 5.0 8.70 33.65 0.20 42.00 48.90 13.60 2.983 kfar srby87 11.3 6.3 2.06 10.6 6.0 1.81 11.2 6.3 2.02 33.80 -0.20 48.00 138.00 13.20 8.418 kfar srby87 10.9 6.1 5.74 10.3 5.7 5.13 10.9 6.1 5.74 33.85 0.00 89.00 57.30 10.00 3.495 kfar srby87 8.3 4.9 2.41 7.9 4.6 2.18 8.7 5.0 2.65 33.90 0.10 106.00 182.00 8.30 11.102 ktan srby87 7.1 4.7 8.12 6.6 4.5 7.02 7.0 4.7 7.90 34.15 -0.10 89.00 40.40 8.30 2.464 ktan srby87 34.25 0.10 53.00 50.90 3.70 3.105 knear srby87 3.5 6.0 2.78 3.3 5.6 2.47 3.3 6.0 2.47 34.35 -0.85 13.00 2.50 0.90 0.152 knear srby87 0.9 7.8 0.15 0.9 7.2 0.15 1.1 7.6 0.23 34.40 -0.20 53.00 6.70 3.70 0.409 knear srby87 3.5 6.0 0.37 3.3 5.6 0.33 3.3 6.0 0.33 34.65 -0.80 55.00 37.50 3.90 2.287 knear srby87 3.6 5.9 1.95 3.4 5.6 1.74 3.5 6.0 1.84 34.70 -0.70 46.00 230.00 3.30 14.030 knear srby87 3.1 6.2 12.38 2.9 5.9 10.83 3.0 6.3 11.60 34.80 -0.15 76.00 38.90 5.60 2.373 knear srby87 4.9 5.3 1.82 4.6 5.0 1.60 4.6 5.4 1.60 35.05 0.30 51.00 44.10 3.60 2.690 knear srby87 3.4 6.1 2.40 3.2 5.7 2.13 3.2 6.1 2.13 35.15 -0.75 35.00 30.80 3.30 1.879 knear srby87 2.4 6.7 0.99 2.3 6.3 0.91 2.4 6.7 0.99 35.20 -0.10 13.00 3.80 0.90 0.232 knear srby87 0.9 7.8 0.23 0.9 7.3 0.23 1.1 7.6 0.35 35.75 0.15 82.00 273.00 10.20 16.653 kfar srby87 8.3 5.2 11.03 7.9 4.9 9.99 8.6 5.3 11.84 35.80 -0.20 29.00 7.70 2.00 0.470 knear srby87 2.0 7.0 0.47 1.9 6.5 0.42 2.0 6.9 0.47 35.95 -0.50 58.00 6.20 4.10 0.378 knear srby87 3.8 5.9 0.32 3.6 5.5 0.29 3.6 6.0 0.29 36.10 0.65 77.00 101.00 5.60 6.161 knear srby87 5.1 5.3 5.11 4.7 5.0 4.34 4.7 5.5 4.34 36.30 -0.10 57.00 12.10 42.658 kfar dect86 10.0 5.9 29.14 9.4 5.6 25.74 10.0 5.9 29.14 36.40 -0.10 52.00 60.60 3.60 3.697 knear srby87 3.4 6.1 3.30 3.2 5.7 2.92 3.3 6.2 3.11 36.50 -0.15 77.00 107.00 5.90 6.527 knear srby87 5.1 5.3 4.88 4.8 5.0 4.32 4.8 5.5 4.32 36.90 -0.05 80.00 36.50 5.90 2.226 knear srby87 5.5 5.3 1.93 5.1 5.0 1.66 5.0 5.4 1.60 37.35 0.25 88.00 199.00 8.60 12.139 ktan srby87 6.8 5.2 7.59 6.4 4.9 6.72 37.45 0.10 41.00 4.00 3.00 0.244 knear srby87 2.7 6.5 0.20 2.6 6.1 0.18 2.7 6.6 0.20 37.75 -0.20 60.00 137.00 11.60 8.357 kfar srby87 9.5 5.9 5.61 8.9 5.5 4.92 9.5 5.9 5.61 38.25 -0.15 65.00 32.70 11.10 1.995 kfar srby87 9.0 5.8 1.31 8.5 5.4 1.17 9.1 5.8 1.34 38.90 0.40 32.00 2.20 5.754 knear dect86 2.2 6.9 5.75 2.1 6.5 5.24 2.2 6.9 5.75 38.95 -0.45 42.00 16.30 2.90 0.994 knear srby87 2.8 6.5 0.93 2.7 6.1 0.86 2.8 6.6 0.93 39.85 -0.20 57.00 1718.00 11.30 104.798 kfar srby87 9.2 6.1 69.47 8.6 5.7 60.70 9.2 6.1 69.47 40.30 -0.45 74.00 14.70 5.70 0.897 knear srby87 5.5 5.6 0.84 5.1 5.3 0.72 5.0 5.7 0.69 41.00 -0.20 38.00 16.10 2.70 0.982 knear srby87 2.6 6.8 0.91 2.5 6.3 0.84 2.6 6.8 0.91 41.15 -0.20 60.00 464.00 10.70 28.304 kfar srby87 8.6 6.0 18.28 8.1 5.7 16.22 8.6 6.0 18.28 41.90 -0.40 59.00 84.30 10.60 5.142 kfar srby87 8.5 6.1 3.31 8.0 5.7 2.93 8.5 6.1 3.31 42.15 -0.60 67.00 50.30 5.40 3.068 knear srby87 5.0 5.8 2.63 4.7 5.5 2.32 4.7 5.9 2.32 42.35 -0.05 58.00 80.20 10.50 4.892 kfar srby87 8.4 6.1 3.13 7.9 5.8 2.77 8.5 6.1 3.21 42.75 -0.35 59.00 39.80 4.60 2.428 knear srby87 4.3 6.1 2.12 4.0 5.7 1.84 4.1 6.2 1.93 43.10 0.05 12.00 102.00 13.80 6.222 kfar srby87 11.7 8.0 4.47 10.8 7.4 3.81 11.2 7.7 4.10 43.20 -0.50 57.00 7.50 4.40 0.457 knear srby87 4.1 6.2 0.40 3.9 5.8 0.36 4.0 6.2 0.38 44.35 -0.20 64.00 426.00 9.20 25.986 kfar srby87 7.0 6.0 15.04 6.5 5.7 12.97 7.2 6.0 15.92 45.45 0.05 58.00 289.00 9.50 17.629 kfar srby87 7.4 6.2 10.70 6.9 5.8 9.30 7.4 6.2 10.70 46.00 0.20 25.00 1.80 0.513 knear dect86 1.7 7.4 0.46 1.7 6.9 0.46 1.9 7.3 0.57 46.30 -0.20 59.00 46.50 9.10 2.836 kfar srby87 6.8 6.2 1.58 6.3 5.8 1.36 6.9 6.2 1.63 47.05 0.25 55.00 41.80 9.30 2.550 kfar srby87 7.1 6.4 1.49 6.6 6.0 1.28 7.1 6.4 1.49 48.60 0.25 10.00 36.50 12.50 2.226 kfar srby87 10.6 8.1 1.60 9.9 7.5 1.40 10.2 7.8 1.48 48.60 0.00 20.00 63.40 11.80 3.867 kfar srby87 9.9 7.7 2.72 9.2 7.1 2.35 9.5 7.5 2.51 48.85 0.15 51.00 38.70 6.60 2.361 ktan srby87 49.50 -0.40 57.00 665.00 6.60 40.565 ktan srby87 5.5 6.5 28.17 5.2 6.1 25.18 5.5 6.4 28.17 49.75 -0.55 68.00 15.40 6.50 0.939 ktan srby87 5.5 6.5 0.67 5.2 6.1 0.60 5.4 6.4 0.65 50.05 0.60 -2.00 112.00 13.00 6.832 kout srby87 11.3 8.7 5.16 10.4 8.1 4.37 10.7 8.4 4.63 50.20 -0.50 45.00 3.60 2.512 kfar dect86 7.2 6.8 10.05 6.6 6.3 8.44 6.9 6.7 9.23 50.85 0.25 43.00 5.70 3.60 0.348 knear srby87 3.6 6.8 0.35 3.5 6.4 0.33 3.7 6.8 0.37

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 25

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 51.35 -0.05 54.00 71.30 6.30 4.349 ktan srby87 5.3 6.6 3.08 5.0 6.2 2.74 5.3 6.6 3.08 52.10 -0.30 59.00 6.10 18.197 ktan dect86 5.2 6.7 13.22 4.9 6.3 11.74 5.2 6.6 13.22 52.30 -0.05 52.00 7.30 6.10 0.445 ktan srby87 5.2 6.7 0.32 4.9 6.3 0.29 5.1 6.7 0.31 52.55 -0.95 64.00 97.20 6.10 5.929 ktan srby87 5.2 6.7 4.31 4.9 6.4 3.83 5.1 6.7 4.14 53.15 -0.25 61.00 11.70 6.00 0.714 ktan srby87 5.1 6.8 0.52 4.8 6.4 0.46 5.0 6.7 0.50 53.55 0.05 23.00 11.10 1.80 0.677 knear srby87 1.7 7.6 0.60 1.8 7.1 0.68 2.0 7.5 0.84 54.10 -0.05 40.00 21.90 8.20 1.336 kfar srby87 6.2 7.0 0.76 5.5 6.5 0.60 5.7 6.9 0.65 54.65 0.80 31.00 67.10 9.00 4.093 kfar srby87 7.2 7.3 2.62 6.6 6.8 2.20 6.8 7.2 2.34 55.30 0.20 30.00 72.60 9.00 4.429 kfar srby87 7.1 7.4 2.76 6.5 6.9 2.31 6.7 7.2 2.45 55.70 0.00 36.00 5.60 8.318 ktan dect86 56.80 1.90 -54.60 14.40 1.400 kout mk88 14.9 12.5 1.50 13.6 11.4 1.25 13.4 11.3 1.21 59.30 -0.20 28.00 6.10 2.70 0.372 knear srby87 2.8 7.5 0.40 3.0 7.0 0.46 3.5 7.4 0.63 59.90 1.50 -65.00 14.90 0.580 kout mk88 15.4 13.3 0.62 14.0 12.1 0.51 13.7 11.9 0.49 60.00 0.10 22.00 110.00 8.00 6.710 kfar srby87 6.5 7.7 4.43 5.9 7.2 3.65 5.8 7.5 3.53 60.90 -0.10 23.00 13.80 7.50 0.842 kfar srby87 6.1 7.7 0.56 5.4 7.1 0.44 5.2 7.5 0.40 61.50 0.10 22.00 32.90 7.40 2.007 kfar srby87 6.0 7.7 1.32 5.3 7.2 1.03 5.1 7.5 0.95 63.10 0.40 20.00 21.20 7.00 1.293 kfar srby87 5.7 7.8 0.86 5.0 7.3 0.66 4.7 7.6 0.58 63.50 0.00 -9.70 8.49 38.019 kout sod91 8.8 9.1 40.85 8.0 8.4 33.76 8.0 8.7 33.76 65.50 1.40 -72.20 29.00 12.00 5.800 kout dbt90 14.9 13.7 8.94 13.5 12.5 7.34 13.0 12.2 6.81 65.95 0.85 -63.00 4.40 12.00 0.900 kout dbt90 13.6 12.8 1.16 12.3 11.6 0.95 12.0 11.5 0.90 66.45 1.75 -60.90 7.30 12.00 1.400 kout dbt90 13.2 12.5 1.69 12.0 11.5 1.40 11.7 11.4 1.33 66.70 1.45 -69.10 4.50 12.00 0.900 kout dbt90 14.2 13.3 1.26 12.8 12.2 1.02 12.4 12.0 0.96 67.00 1.15 -68.00 3.30 12.00 0.700 kout dbt90 14.0 13.2 0.95 12.6 12.0 0.77 12.2 11.9 0.72 67.50 1.00 -51.10 8.00 12.00 1.600 kout dbt90 11.9 11.7 1.57 10.8 10.7 1.30 10.5 10.7 1.23 68.16 0.90 -63.90 4.90 12.00 1.000 kout dbt90 13.2 12.8 1.21 11.9 11.6 0.98 11.6 11.5 0.93 68.19 1.24 -60.90 14.00 12.00 2.900 kout dbt90 12.8 12.5 3.30 11.6 11.4 2.71 11.3 11.3 2.57 68.20 0.90 -63.40 2.50 12.00 0.500 kout dbt90 13.1 12.7 0.60 11.9 11.6 0.49 11.5 11.5 0.46 68.30 1.25 -62.60 26.00 12.00 5.200 kout dbt90 13.0 12.6 6.10 11.8 11.5 5.03 11.4 11.4 4.69 68.37 1.26 -64.00 9.30 12.00 1.800 kout dbt90 13.1 12.8 2.15 11.9 11.6 1.77 11.5 11.5 1.65 68.56 1.22 -61.90 0.90 12.00 0.200 kout dbt90 12.9 12.6 0.23 11.6 11.5 0.19 11.3 11.4 0.18 69.00 0.80 -62.30 6.10 12.00 1.200 kout dbt90 12.8 12.6 1.37 11.6 11.5 1.12 11.2 11.4 1.05 69.30 0.85 -63.00 4.40 12.00 0.900 kout dbt90 12.8 12.6 1.02 11.6 11.5 0.84 11.2 11.4 0.78 69.44 1.39 -67.70 2.20 12.00 0.400 kout dbt90 13.4 13.1 0.50 12.1 11.9 0.41 11.6 11.8 0.37 69.74 1.46 -64.20 12.00 12.00 2.300 kout dbt90 12.9 12.7 2.66 11.6 11.6 2.15 11.2 11.5 2.00 69.83 1.27 -60.60 4.20 12.00 0.800 kout dbt90 12.4 12.4 0.85 11.2 11.3 0.70 10.9 11.2 0.66 69.85 1.50 -63.60 22.00 12.00 4.400 kout dbt90 12.8 12.7 5.01 11.5 11.6 4.04 11.1 11.5 3.76 69.85 1.01 -57.30 1.00 12.00 0.200 kout dbt90 12.0 12.1 0.20 10.9 11.1 0.17 10.6 11.0 0.16 69.90 0.95 -65.30 19.00 12.00 3.800 kout dbt90 12.9 12.8 4.39 11.7 11.7 3.61 11.3 11.6 3.37 69.92 1.50 -63.80 4.80 12.00 1.000 kout dbt90 12.8 12.7 1.14 11.5 11.6 0.92 11.1 11.5 0.86 70.01 1.04 -63.60 6.30 12.00 1.200 kout dbt90 12.7 12.7 1.34 11.5 11.6 1.10 11.1 11.4 1.03 70.02 1.17 -67.10 11.00 12.00 2.200 kout dbt90 13.1 13.0 2.62 11.9 11.8 2.16 11.4 11.7 1.99 70.05 1.15 -66.50 19.00 12.00 3.800 kout dbt90 13.1 12.9 4.53 11.8 11.8 3.67 11.4 11.7 3.43 70.16 1.17 -66.90 6.10 12.00 1.200 kout dbt90 13.1 13.0 1.43 11.8 11.8 1.16 11.4 11.7 1.08 70.16 1.29 -64.80 2.60 12.00 0.500 kout dbt90 12.8 12.8 0.57 11.6 11.6 0.47 11.2 11.5 0.44 70.30 1.12 -65.70 7.10 12.00 1.400 kout dbt90 12.9 12.8 1.62 11.7 11.7 1.33 11.2 11.6 1.22 70.33 0.96 -62.90 5.60 12.00 1.100 kout dbt90 12.6 12.6 1.21 11.4 11.5 0.99 11.0 11.4 0.92 70.40 0.50 -70.80 6.80 12.00 1.400 kout dbt90 13.5 13.3 1.77 12.2 12.1 1.45 11.7 11.9 1.33 70.40 0.90 -62.60 14.00 12.00 2.700 kout dbt90 12.5 12.5 2.93 11.3 11.5 2.39 10.9 11.4 2.23 70.53 1.15 -59.20 4.80 12.00 1.000 kout dbt90 12.1 12.2 1.02 10.9 11.2 0.83 10.6 11.1 0.78 70.90 0.55 -71.00 15.00 12.00 2.900 kout dbt90 13.4 13.3 3.62 12.1 12.1 2.95 11.6 11.9 2.71 71.10 -0.40 10.00 5.20 1.40 0.317 knear srby87 1.1 8.2 0.20 1.6 7.6 0.41 2.7 8.0 1.18 74.10 1.50 -36.20 8.40 0.400 kout mk88 8.9 10.5 0.45 8.0 9.6 0.36 7.8 9.8 0.34 75.00 1.90 -79.20 13.10 0.150 kout mk88 13.6 14.0 0.16 12.2 12.7 0.13 11.6 12.5 0.12 76.20 0.10 -2.00 72.00 5.10 4.392 kout srby87 4.8 8.7 3.89 4.1 8.1 2.84 3.5 8.4 2.07 76.30 -0.70 -1.00 43.20 4.90 2.635 kout srby87 4.7 8.7 2.42 3.9 8.0 1.67 3.3 8.4 1.20 77.20 0.70 2.00 75.70 4.10 4.618 kout srby87 4.0 8.5 4.40 1.9 8.3 0.99 78.00 -0.30 -4.00 19.80 4.80 1.208 kout srby87 4.7 8.8 1.16 3.9 8.2 0.80 3.3 8.5 0.57 78.10 -0.80 0.00 29.70 4.10 1.812 kout srby87 4.1 8.6 1.81 2.1 8.3 0.48 78.20 0.10 11.00 11.30 2.00 0.689 ktan srby87 1.7 8.3 0.50 1.6 7.8 0.44 1.7 8.2 0.50 78.80 1.70 -76.00 11.80 0.700 kout mk88 12.3 13.6 0.76 11.1 12.3 0.62 10.5 12.1 0.55 78.80 -0.50 -1.00 42.10 4.10 2.568 kout srby87 4.0 8.7 2.44 3.3 8.0 1.66 2.3 8.4 0.81 79.20 0.10 8.00 6.40 1.90 0.390 ktan srby87 1.6 8.3 0.28 1.5 7.9 0.24 1.6 8.3 0.28 79.60 -0.60 4.00 12.10 2.50 0.738 kfar srby87 2.9 8.5 0.99 1.9 7.9 0.43 1.5 8.4 0.27 80.10 1.90 -72.10 11.20 0.200 kout mk88 11.6 13.2 0.21 10.4 12.0 0.17 9.8 11.8 0.15 80.70 0.70 -1.00 14.10 3.50 0.860 kout srby87 3.6 8.7 0.91 2.8 8.0 0.55 1.4 8.4 0.14 80.80 -0.50 -3.00 3.60 3.80 0.220 kout srby87 3.9 8.8 0.23 3.1 8.1 0.15 2.2 8.4 0.07 81.20 1.00 13.00 9.00 1.50 0.549 ktan srby87 1.3 8.4 0.41 1.2 7.9 0.35 1.3 8.3 0.41 81.40 0.70 -2.00 10.30 3.50 0.628 kout srby87 3.6 8.7 0.66 2.8 8.1 0.40 1.3 8.4 0.09 81.40 0.00 -4.00 3.60 2.00 0.220 kout srby87 3.9 8.8 0.84 3.2 8.1 0.56 2.3 8.5 0.29 81.70 0.60 -2.00 42.90 2.00 2.617 kout srby87 3.5 8.7 8.01 2.7 8.1 4.77 1.2 8.4 0.94 82.00 -0.40 5.00 4.10 1.40 0.250 ktan srby87 1.1 7.9 0.15 1.2 8.3 0.18 83.30 1.90 -72.30 10.60 0.200 kout mk88 11.0 13.1 0.22 9.9 12.0 0.17 9.2 11.8 0.15 83.50 -1.00 2.00 2.00 1.10 0.122 kout srby87 2.3 8.5 0.53 0.9 8.4 0.08 84.60 0.20 -1.00 48.60 2.00 2.965 kout srby87 2.7 8.7 5.40 1.8 8.0 2.40 0.8 8.5 0.47 84.70 1.70 -83.00 11.40 1.800 kout mk88 12.2 14.2 2.06 10.9 12.9 1.65 10.1 12.6 1.41 85.00 2.40 -51.00 7.80 0.200 kout mk88 8.3 11.4 0.23 7.4 10.4 0.18 7.0 10.5 0.16 85.00 2.40 -82.80 11.50 0.300 kout mk88 12.1 14.2 0.33 10.8 12.9 0.26 10.0 12.6 0.23 85.40 0.00 -38.00 6.10 7.10 0.372 kout srby87 6.9 10.5 0.35 6.1 9.7 0.27 5.7 9.8 0.24 86.00 0.50 -16.80 4.18 5.495 kout sod91 4.6 9.4 6.65 3.9 8.7 4.78 3.4 8.9 3.64 88.40 1.90 -63.70 8.60 0.200 kout mk88 9.2 12.3 0.23 8.2 11.3 0.18 7.6 11.2 0.16 88.80 1.90 -60.60 8.30 0.120 kout mk88 8.8 12.1 0.13 7.8 11.0 0.11 7.2 11.0 0.09 89.90 1.30 -71.00 9.20 0.630 kout mk88 9.8 12.9 0.71 8.7 11.8 0.56 8.0 11.7 0.48 91.00 -0.50 -24.60 4.25 7.413 kout sod91 4.7 9.8 9.07 4.0 9.0 6.57 3.5 9.2 5.03

26 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 91.00 -1.00 -36.30 5.46 8.710 kout sod91 5.9 10.4 10.17 5.1 9.6 7.60 4.6 9.7 6.18 92.90 1.90 -87.70 10.40 0.200 kout mk88 11.5 14.7 0.24 10.2 13.3 0.19 9.4 13.0 0.16 93.20 1.70 -71.20 9.00 0.200 kout mk88 9.3 13.0 0.21 8.3 11.8 0.17 7.6 11.7 0.14 103.00 2.00 -18.30 2.31 3.802 kout sod91 2.7 9.5 5.19 2.2 8.7 3.45 1.7 9.0 2.06 106.16 0.99 -60.70 0.98 6.33 0.119 kout hcs01 6.8 12.3 0.14 5.9 11.2 0.10 5.3 11.2 0.08 106.21 1.47 -22.38 0.66 2.50 0.080 kout hcs01 2.9 9.7 0.11 2.4 8.9 0.07 1.9 9.2 0.05 106.27 -0.01 -56.36 3.20 5.86 0.387 kout hcs01 6.3 11.9 0.45 5.5 10.9 0.34 4.9 10.9 0.27 106.36 1.34 -25.49 0.79 2.80 0.096 kout hcs01 3.2 9.9 0.13 2.6 9.1 0.08 2.2 9.3 0.06 106.44 0.41 -55.63 1.20 5.77 0.145 kout hcs01 6.2 11.9 0.17 5.4 10.9 0.13 4.8 10.9 0.10 106.48 0.90 -54.17 2.70 5.61 0.327 kout hcs01 6.1 11.8 0.39 5.3 10.8 0.29 4.7 10.8 0.23 106.51 1.09 -60.92 1.70 6.33 0.206 kout hcs01 6.8 12.3 0.24 5.9 11.2 0.18 5.3 11.2 0.14 106.59 1.01 -61.62 2.90 6.40 0.351 kout hcs01 6.9 12.4 0.41 6.0 11.3 0.31 5.4 11.3 0.25 106.61 1.02 -11.89 1.10 1.42 0.133 kout hcs01 1.8 9.2 0.21 1.3 8.5 0.11 0.8 8.8 0.04 106.89 -1.03 -37.89 0.76 3.96 0.092 kout hcs01 4.3 10.6 0.11 3.7 9.8 0.08 3.2 9.9 0.06 106.98 5.26 -8.53 1.60 1.05 0.194 kout hcs01 1.4 9.0 0.34 1.0 8.3 0.18 0.5 8.7 0.04 107.16 0.67 -52.78 1.40 5.42 0.169 kout hcs01 5.9 11.7 0.20 5.1 10.7 0.15 4.5 10.7 0.12 107.17 0.01 -50.58 2.50 5.19 0.303 kout hcs01 5.6 11.5 0.35 4.9 10.5 0.27 4.3 10.6 0.21 107.17 4.52 -6.33 1.00 0.79 0.121 kout hcs01 1.2 8.9 0.28 0.7 8.2 0.10 0.3 8.6 0.02 107.23 -0.93 -41.58 1.60 4.29 0.194 kout hcs01 4.7 10.9 0.23 4.0 10.0 0.17 3.5 10.1 0.13 107.36 0.15 -50.66 0.81 5.19 0.098 kout hcs01 5.6 11.5 0.11 4.9 10.5 0.09 4.3 10.6 0.07 107.40 -0.14 -50.69 2.10 5.19 0.254 kout hcs01 5.6 11.5 0.30 4.9 10.5 0.23 4.3 10.6 0.17 107.44 0.50 -50.76 0.72 5.19 0.087 kout hcs01 5.6 11.5 0.10 4.9 10.5 0.08 4.3 10.6 0.06 107.66 -2.27 -55.19 1.80 5.65 0.218 kout hcs01 6.1 11.9 0.25 5.3 10.9 0.19 4.7 10.9 0.15 107.81 0.74 -52.20 0.75 5.32 0.091 kout hcs01 5.8 11.6 0.11 5.0 10.7 0.08 4.4 10.7 0.06 108.03 1.04 -57.45 0.73 5.86 0.088 kout hcs01 6.3 12.1 0.10 5.5 11.0 0.08 4.9 11.0 0.06 108.36 0.43 -47.77 0.76 4.83 0.092 kout hcs01 5.3 11.3 0.11 4.5 10.4 0.08 4.0 10.5 0.06 108.47 -2.85 -53.70 0.84 5.44 0.102 kout hcs01 5.9 11.8 0.12 5.1 10.8 0.09 4.5 10.8 0.07 108.54 -1.02 -51.98 31.00 5.25 3.751 kout hcs01 5.7 11.6 4.42 4.9 10.7 3.27 4.3 10.7 2.52 108.63 -0.17 -50.32 0.71 5.07 0.086 kout hcs01 5.5 11.5 0.10 4.8 10.5 0.08 4.2 10.6 0.06 108.64 0.73 -54.88 3.40 5.54 0.411 kout hcs01 6.0 11.9 0.48 5.2 10.9 0.36 4.6 10.9 0.28 108.71 -1.13 -50.13 2.30 5.05 0.278 kout hcs01 5.5 11.5 0.33 4.7 10.5 0.24 4.2 10.6 0.19 108.73 -2.63 -55.66 3.40 5.63 0.411 kout hcs01 6.1 11.9 0.48 5.3 10.9 0.36 4.6 10.9 0.27 108.76 2.70 -11.11 1.60 1.25 0.194 kout hcs01 1.6 9.1 0.32 1.2 8.5 0.18 0.7 8.8 0.06 108.77 1.34 -7.58 0.66 0.88 0.080 kout hcs01 1.2 9.0 0.15 0.8 8.3 0.07 0.3 8.6 0.01 108.78 -0.83 -49.71 1.50 5.00 0.182 kout hcs01 5.4 11.5 0.21 4.7 10.5 0.16 4.1 10.6 0.12 108.87 -0.92 -50.34 1.30 5.06 0.157 kout hcs01 5.5 11.5 0.19 4.8 10.5 0.14 4.2 10.6 0.11 108.89 0.32 -52.61 50.00 5.29 6.050 kout hcs01 5.7 11.7 7.02 5.0 10.7 5.40 4.4 10.7 4.19 108.96 -0.34 -48.07 10.00 4.83 1.210 kout hcs01 5.2 11.3 1.40 4.5 10.4 1.05 4.0 10.5 0.83 108.97 0.31 -56.09 1.10 5.65 0.133 kout hcs01 6.1 12.0 0.16 5.3 10.9 0.12 4.7 11.0 0.09 109.02 -0.25 -47.12 0.90 4.73 0.109 kout hcs01 5.1 11.3 0.13 4.4 10.3 0.09 3.9 10.4 0.07 109.11 -0.86 -48.82 2.60 4.89 0.315 kout hcs01 5.3 11.4 0.37 4.6 10.5 0.28 4.0 10.5 0.21 109.32 0.25 -55.48 3.80 5.57 0.460 kout hcs01 6.0 11.9 0.53 5.2 10.9 0.40 4.6 10.9 0.31 109.35 -0.37 -56.85 1.00 5.71 0.121 kout hcs01 6.2 12.0 0.14 5.4 11.0 0.11 4.7 11.0 0.08 109.37 0.39 -53.93 0.87 5.40 0.105 kout hcs01 5.8 11.8 0.12 5.1 10.8 0.09 4.5 10.8 0.07 109.50 6.50 -9.20 1.03 0.229 kout sod91 1.4 9.1 0.42 1.0 8.4 0.22 0.6 8.7 0.08 109.56 1.62 -52.63 1.50 5.26 0.182 kout hcs01 5.7 11.7 0.21 4.9 10.7 0.16 4.4 10.8 0.13 109.62 -1.34 -48.13 1.10 4.80 0.133 kout hcs01 5.2 11.4 0.16 4.5 10.4 0.12 3.9 10.5 0.09 109.64 1.94 -56.86 7.60 5.70 0.920 kout hcs01 6.2 12.1 1.09 5.4 11.0 0.83 4.7 11.0 0.63 109.79 1.99 -60.65 2.00 6.11 0.242 kout hcs01 6.6 12.4 0.28 5.7 11.3 0.21 5.1 11.3 0.17 109.86 -1.29 -34.33 1.60 3.43 0.194 kout hcs01 3.8 10.4 0.24 3.2 9.6 0.17 2.7 9.8 0.12 109.88 2.85 -81.29 1.30 8.63 0.157 kout hcs01 9.2 14.5 0.18 8.1 13.2 0.14 7.2 12.9 0.11 109.89 1.87 -59.70 1.60 6.00 0.194 kout hcs01 6.5 12.3 0.23 5.6 11.2 0.17 5.0 11.2 0.13 109.89 3.05 -65.17 1.40 6.62 0.169 kout hcs01 7.1 12.8 0.19 6.2 11.7 0.15 5.5 11.6 0.12 109.96 0.46 -53.91 4.80 5.37 0.581 kout hcs01 5.8 11.8 0.68 5.0 10.8 0.50 4.4 10.9 0.39 109.97 -0.24 -52.70 1.40 5.24 0.169 kout hcs01 5.7 11.7 0.20 4.9 10.7 0.15 4.3 10.8 0.11 109.99 0.87 -52.39 3.10 5.21 0.375 kout hcs01 5.6 11.7 0.43 4.9 10.7 0.33 4.3 10.8 0.26 110.00 0.00 -52.10 5.18 91.201 kout sod91 5.6 11.7 106.59 4.9 10.7 81.61 4.3 10.7 62.85 110.05 -0.17 -50.46 66.00 5.00 7.986 kout hcs01 5.4 11.5 9.31 4.7 10.6 7.06 4.1 10.6 5.37 110.05 1.78 -5.57 0.59 0.63 0.071 kout hcs01 1.0 8.9 0.18 0.6 8.2 0.06 0.1 8.5 110.22 2.51 -63.59 2.20 6.42 0.266 kout hcs01 6.9 12.7 0.31 6.0 11.6 0.23 5.3 11.5 0.18 110.24 0.03 -52.32 10.00 5.19 1.210 kout hcs01 5.6 11.7 1.41 4.9 10.7 1.08 4.3 10.8 0.83 110.26 1.06 -53.87 1.10 5.35 0.133 kout hcs01 5.8 11.8 0.16 5.0 10.8 0.12 4.4 10.9 0.09 110.28 -0.94 -39.17 1.10 3.87 0.133 kout hcs01 4.3 10.7 0.16 3.6 9.9 0.12 3.1 10.0 0.09 110.32 1.26 -56.90 5.60 5.67 0.678 kout hcs01 6.1 12.1 0.78 5.3 11.0 0.59 4.7 11.0 0.47 110.32 3.45 -71.96 1.10 7.41 0.133 kout hcs01 7.9 13.5 0.15 7.0 12.3 0.12 6.2 12.1 0.09 110.34 -0.63 -36.62 0.72 3.62 0.087 kout hcs01 4.0 10.6 0.11 3.4 9.7 0.08 2.9 9.9 0.06 110.36 3.63 -74.11 0.89 7.68 0.108 kout hcs01 8.2 13.7 0.12 7.2 12.5 0.09 6.4 12.3 0.08 110.40 -0.51 -45.50 72.00 4.49 8.712 kout hcs01 4.9 11.2 10.38 4.2 10.3 7.62 3.7 10.4 5.92 110.44 1.63 -59.45 1.10 5.94 0.133 kout hcs01 6.4 12.3 0.15 5.6 11.2 0.12 4.9 11.2 0.09 110.45 -1.65 -48.80 1.10 4.82 0.133 kout hcs01 5.2 11.4 0.15 4.5 10.5 0.12 3.9 10.5 0.09 110.51 1.03 -51.80 0.87 5.12 0.105 kout hcs01 5.5 11.7 0.12 4.8 10.7 0.09 4.2 10.7 0.07 110.56 0.18 -45.90 0.86 4.52 0.104 kout hcs01 4.9 11.2 0.12 4.2 10.3 0.09 3.7 10.4 0.07 110.58 -0.08 -53.52 5.40 5.29 0.653 kout hcs01 5.7 11.8 0.76 5.0 10.8 0.58 4.4 10.8 0.45 110.60 -2.16 -37.41 1.40 3.69 0.169 kout hcs01 4.1 10.6 0.21 3.5 9.8 0.15 2.9 9.9 0.10 110.64 -0.92 -48.08 3.10 4.73 0.375 kout hcs01 5.1 11.4 0.44 4.4 10.4 0.32 3.9 10.5 0.25 110.65 -0.69 -51.27 11.00 5.06 1.331 kout hcs01 5.5 11.6 1.57 4.8 10.6 1.20 4.2 10.7 0.92 110.66 -0.33 -52.02 4.20 5.13 0.508 kout hcs01 5.6 11.7 0.61 4.8 10.7 0.44 4.2 10.7 0.34 110.71 2.57 -68.50 3.10 6.97 0.375 kout hcs01 7.5 13.2 0.43 6.5 12.0 0.33 5.8 11.9 0.26 110.72 -0.60 -49.34 2.90 4.86 0.351 kout hcs01 5.3 11.5 0.42 4.6 10.5 0.31 4.0 10.6 0.24 110.74 0.23 -57.45 0.82 5.70 0.099 kout hcs01 6.2 12.1 0.12 5.4 11.1 0.09 4.7 11.1 0.07 110.77 -2.71 -34.75 5.60 3.43 0.678 kout hcs01 3.8 10.5 0.83 3.2 9.6 0.59 2.7 9.8 0.42 110.77 1.89 -52.98 0.76 5.23 0.092 kout hcs01 5.7 11.8 0.11 4.9 10.8 0.08 4.3 10.8 0.06 110.80 0.40 -52.19 1.60 5.14 0.194 kout hcs01 5.6 11.7 0.23 4.8 10.7 0.17 4.2 10.8 0.13

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 27

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 110.88 1.88 -10.46 13.00 1.11 1.573 kout hcs01 1.4 9.1 2.50 1.0 8.4 1.28 0.6 8.7 0.46 110.89 -0.29 -55.63 1.40 5.50 0.169 kout hcs01 5.9 12.0 0.19 5.2 11.0 0.15 4.5 11.0 0.11 110.93 1.59 -50.65 0.77 4.98 0.093 kout hcs01 5.4 11.6 0.11 4.7 10.6 0.08 4.1 10.7 0.06 110.94 -0.04 -52.05 0.79 5.12 0.096 kout hcs01 5.6 11.7 0.11 4.8 10.7 0.08 4.2 10.8 0.06 110.95 0.61 -50.59 2.20 4.97 0.266 kout hcs01 5.4 11.6 0.31 4.7 10.6 0.24 4.1 10.7 0.18 110.98 -2.86 -37.11 5.80 3.65 0.702 kout hcs01 4.0 10.6 0.84 3.4 9.8 0.61 2.9 9.9 0.44 110.99 -0.99 -45.10 0.70 4.42 0.085 kout hcs01 4.8 11.2 0.10 4.2 10.2 0.08 3.6 10.3 0.06 111.02 2.42 -47.11 1.00 4.62 0.121 kout hcs01 5.0 11.3 0.14 4.3 10.4 0.10 3.8 10.5 0.08 111.03 3.01 -40.30 0.77 3.95 0.093 kout hcs01 4.3 10.8 0.11 3.7 10.0 0.08 3.2 10.1 0.06 111.09 -2.34 -47.82 2.70 4.69 0.327 kout hcs01 5.1 11.4 0.39 4.4 10.4 0.29 3.8 10.5 0.21 111.17 -1.03 -43.10 1.50 4.21 0.182 kout hcs01 4.6 11.0 0.22 4.0 10.1 0.16 3.4 10.2 0.12 111.19 0.60 -49.22 0.87 4.82 0.105 kout hcs01 5.2 11.5 0.12 4.5 10.5 0.09 4.0 10.6 0.07 111.20 -2.25 -52.54 0.91 5.17 0.110 kout hcs01 5.6 11.7 0.13 4.9 10.8 0.10 4.2 10.8 0.07 111.20 -0.84 -52.98 1.10 5.21 0.133 kout hcs01 5.6 11.8 0.15 4.9 10.8 0.12 4.3 10.8 0.09 111.20 3.21 -71.61 1.20 7.33 0.145 kout hcs01 7.9 13.5 0.17 6.9 12.3 0.13 6.1 12.1 0.10 111.22 -2.26 -49.77 2.20 4.88 0.266 kout hcs01 5.3 11.5 0.31 4.6 10.6 0.24 4.0 10.6 0.18 111.23 1.00 -57.96 0.81 5.73 0.098 kout hcs01 6.2 12.2 0.11 5.4 11.1 0.09 4.8 11.1 0.07 111.27 2.30 -49.26 4.30 4.83 0.520 kout hcs01 5.2 11.5 0.60 4.5 10.5 0.45 4.0 10.6 0.36 111.28 -1.44 -39.84 15.00 3.89 1.815 kout hcs01 4.3 10.8 2.22 3.7 9.9 1.64 3.1 10.1 1.15 111.30 -0.59 -48.54 2.80 4.74 0.339 kout hcs01 5.2 11.4 0.41 4.5 10.5 0.31 3.9 10.5 0.23 111.32 -0.68 -45.00 9.70 4.39 1.174 kout hcs01 4.8 11.2 1.40 4.1 10.2 1.02 3.6 10.3 0.79 111.32 3.36 -65.79 1.20 6.63 0.145 kout hcs01 7.1 12.9 0.17 6.2 11.8 0.13 5.5 11.7 0.10 111.37 0.46 -50.58 3.60 4.95 0.436 kout hcs01 5.4 11.6 0.52 4.7 10.6 0.39 4.1 10.7 0.30 111.38 -1.55 -36.27 0.69 3.54 0.083 kout hcs01 3.9 10.6 0.10 3.3 9.7 0.07 2.8 9.9 0.05 111.40 -2.60 -36.77 1.50 3.59 0.182 kout hcs01 4.0 10.6 0.23 3.4 9.8 0.16 2.8 9.9 0.11 111.43 -2.64 -46.59 1.40 4.55 0.169 kout hcs01 5.0 11.3 0.20 4.3 10.4 0.15 3.7 10.4 0.11 111.44 1.13 -49.67 1.00 4.85 0.121 kout hcs01 5.3 11.5 0.14 4.6 10.6 0.11 4.0 10.6 0.08 111.45 1.23 -47.21 1.20 4.60 0.145 kout hcs01 5.0 11.3 0.17 4.3 10.4 0.13 3.8 10.5 0.10 111.49 0.73 -53.81 200.00 5.28 24.200 kout hcs01 5.7 11.9 28.20 5.0 10.8 21.70 4.4 10.9 16.81 111.49 1.28 -46.17 3.60 4.50 0.436 kout hcs01 4.9 11.3 0.52 4.2 10.3 0.38 3.7 10.4 0.29 111.50 -3.00 -41.70 4.07 27.542 kout sod91 4.4 10.9 32.19 3.8 10.0 24.01 3.2 10.2 17.03 111.50 2.00 -10.50 1.10 5.370 kout sod91 1.4 9.1 8.70 1.0 8.4 4.44 0.6 8.7 1.60 111.57 -2.73 -39.52 33.00 3.85 3.993 kout hcs01 4.2 10.8 4.75 3.6 9.9 3.49 3.1 10.0 2.59 111.61 -2.69 -37.91 1.90 3.69 0.230 kout hcs01 4.1 10.7 0.28 3.5 9.8 0.21 2.9 10.0 0.14 111.64 1.32 -43.43 0.89 4.22 0.108 kout hcs01 4.6 11.1 0.13 4.0 10.2 0.10 3.4 10.3 0.07 111.67 -2.29 -47.11 5.00 4.59 0.605 kout hcs01 5.0 11.3 0.72 4.3 10.4 0.53 3.7 10.5 0.39 111.68 3.17 -68.98 1.60 6.99 0.194 kout hcs01 7.5 13.3 0.22 6.6 12.1 0.17 5.8 11.9 0.13 111.70 0.01 -30.14 1.10 2.94 0.133 kout hcs01 3.3 10.2 0.17 2.8 9.4 0.12 2.3 9.6 0.08 111.70 2.61 -56.17 3.00 5.53 0.363 kout hcs01 6.0 12.1 0.43 5.2 11.0 0.32 4.6 11.0 0.25 111.70 4.20 -29.53 1.60 2.90 0.194 kout hcs01 3.2 10.2 0.24 2.7 9.4 0.17 2.3 9.6 0.12 111.71 2.48 -54.70 4.60 5.37 0.557 kout hcs01 5.8 11.9 0.65 5.0 10.9 0.48 4.4 11.0 0.37 111.84 1.87 -51.99 0.83 5.08 0.100 kout hcs01 5.5 11.7 0.12 4.8 10.7 0.09 4.2 10.8 0.07 111.89 -2.73 -36.90 1.00 3.58 0.121 kout hcs01 3.9 10.6 0.14 3.4 9.8 0.11 2.8 9.9 0.07 111.90 2.77 -78.40 3.10 8.18 0.375 kout hcs01 8.8 14.3 0.43 7.7 13.0 0.33 6.8 12.7 0.26 111.92 0.93 -50.11 17.00 4.87 2.057 kout hcs01 5.3 11.6 2.44 4.6 10.6 1.84 4.0 10.7 1.39 112.05 2.35 -46.01 0.92 4.46 0.111 kout hcs01 4.9 11.3 0.13 4.2 10.3 0.10 3.7 10.4 0.08 112.07 2.14 -52.67 0.73 5.14 0.088 kout hcs01 5.6 11.8 0.10 4.8 10.8 0.08 4.2 10.8 0.06 112.09 2.75 -54.64 1.20 5.35 0.145 kout hcs01 5.8 11.9 0.17 5.0 10.9 0.13 4.4 11.0 0.10 112.13 2.39 -78.74 1.10 8.21 0.133 kout hcs01 8.8 14.4 0.15 7.7 13.0 0.12 6.8 12.7 0.09 112.17 -2.30 -37.65 20.00 3.64 2.420 kout hcs01 4.0 10.7 2.92 3.4 9.8 2.11 2.9 10.0 1.54 112.18 -1.86 -45.14 6.50 4.36 0.787 kout hcs01 4.8 11.2 0.95 4.1 10.3 0.70 3.5 10.4 0.51 112.20 5.21 -52.70 0.89 5.17 0.108 kout hcs01 5.6 11.8 0.13 4.8 10.8 0.09 4.3 10.9 0.07 112.22 -2.54 -44.53 0.77 4.31 0.093 kout hcs01 4.7 11.2 0.11 4.0 10.2 0.08 3.5 10.3 0.06 112.27 -1.08 -42.56 0.94 4.10 0.114 kout hcs01 4.5 11.0 0.14 3.9 10.1 0.10 3.3 10.2 0.07 112.31 2.50 -78.14 0.77 8.13 0.093 kout hcs01 8.7 14.3 0.11 7.6 13.0 0.08 6.7 12.7 0.06 112.62 -0.78 -33.14 0.71 3.18 0.086 kout hcs01 3.5 10.4 0.10 3.0 9.6 0.08 2.5 9.7 0.05 112.73 2.70 -16.19 6.80 1.60 0.823 kout hcs01 1.9 9.4 1.16 1.5 8.7 0.72 1.1 9.0 0.39 112.86 -0.69 -35.33 2.10 3.38 0.254 kout hcs01 3.7 10.5 0.30 3.2 9.7 0.23 2.7 9.8 0.16 112.90 0.34 -52.42 0.93 5.07 0.113 kout hcs01 5.5 11.8 0.13 4.8 10.8 0.10 4.2 10.8 0.08 112.99 -2.18 -34.98 1.20 3.34 0.145 kout hcs01 3.7 10.5 0.18 3.1 9.7 0.12 2.6 9.8 0.09 113.03 -1.52 -30.52 0.99 2.92 0.120 kout hcs01 3.3 10.2 0.15 2.7 9.4 0.10 2.2 9.6 0.07 113.46 0.94 -59.37 0.87 5.80 0.105 kout hcs01 6.3 12.4 0.12 5.4 11.3 0.09 4.8 11.3 0.07 113.49 1.61 -12.09 0.96 1.19 0.116 kout hcs01 1.5 9.2 0.18 1.1 8.5 0.10 0.7 8.8 0.04 113.60 -0.90 -49.25 2.10 4.71 0.254 kout hcs01 5.1 11.6 0.30 4.4 10.6 0.22 3.8 10.6 0.17 113.70 -0.62 -43.19 1.80 4.10 0.218 kout hcs01 4.5 11.1 0.26 3.9 10.2 0.20 3.3 10.3 0.14 113.87 -0.19 -38.59 1.10 3.64 0.133 kout hcs01 4.0 10.8 0.16 3.4 9.9 0.12 2.9 10.0 0.08 114.09 -0.58 -36.19 1.00 3.41 0.121 kout hcs01 3.8 10.6 0.15 3.2 9.8 0.11 2.7 9.9 0.08 114.12 -1.15 -32.95 0.69 3.10 0.083 kout hcs01 3.5 10.4 0.11 2.9 9.6 0.07 2.4 9.7 0.05 114.16 2.04 -65.99 1.30 6.54 0.157 kout hcs01 7.0 13.1 0.18 6.1 11.9 0.14 5.4 11.8 0.11 114.20 2.66 -51.63 1.40 4.95 0.169 kout hcs01 5.4 11.8 0.20 4.6 10.8 0.15 4.1 10.8 0.12 114.21 -0.98 -31.87 0.91 3.00 0.110 kout hcs01 3.3 10.3 0.13 2.8 9.5 0.10 2.3 9.7 0.06 114.24 0.33 -53.87 1.50 5.17 0.182 kout hcs01 5.6 12.0 0.21 4.9 10.9 0.16 4.2 10.9 0.12 114.33 0.79 -101.15 12.35 0.140 kout bw94 12.7 17.9 0.15 11.1 16.1 0.11 9.6 15.2 0.08 114.41 3.21 -69.82 0.77 7.01 0.093 kout hcs01 7.5 13.5 0.11 6.6 12.3 0.08 5.8 12.1 0.06 114.47 -0.89 -46.94 0.77 4.44 0.093 kout hcs01 4.8 11.4 0.11 4.2 10.4 0.08 3.6 10.5 0.06 114.48 2.22 -64.34 0.78 6.34 0.094 kout hcs01 6.8 12.9 0.11 6.0 11.8 0.08 5.2 11.7 0.06 114.54 2.88 -57.11 0.87 5.52 0.105 kout hcs01 6.0 12.2 0.12 5.2 11.2 0.09 4.6 11.2 0.07 114.56 2.91 -72.09 0.97 7.30 0.117 kout hcs01 7.8 13.7 0.13 6.8 12.5 0.10 6.0 12.3 0.08 114.57 -0.19 -37.56 1.30 3.52 0.157 kout hcs01 3.9 10.7 0.19 3.3 9.8 0.14 2.8 10.0 0.10 114.58 -0.42 -49.68 10.00 4.72 1.210 kout hcs01 5.1 11.6 1.41 4.4 10.6 1.05 3.8 10.7 0.78 114.89 3.81 -22.32 0.92 2.10 0.111 kout hcs01 2.4 9.8 0.14 2.0 9.0 0.10 1.6 9.3 0.06 114.93 3.18 -64.42 1.10 6.35 0.133 kout hcs01 6.8 13.0 0.15 6.0 11.8 0.12 5.2 11.7 0.09 114.98 4.88 -18.27 0.60 1.73 0.073 kout hcs01 2.0 9.5 0.10 1.6 8.8 0.06 1.2 9.1 0.04

28 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 115.02 1.05 -13.06 1.40 1.24 0.169 kout hcs01 1.5 9.3 0.25 1.2 8.6 0.16 0.8 8.8 0.07 115.14 -1.51 -40.54 3.40 3.79 0.411 kout hcs01 4.2 10.9 0.50 3.6 10.0 0.37 3.0 10.2 0.26 115.26 3.62 -60.99 1.00 5.95 0.121 kout hcs01 6.4 12.6 0.14 5.6 11.5 0.11 4.9 11.5 0.08 115.38 2.06 -10.95 1.30 1.04 0.157 kout hcs01 1.3 9.2 0.25 1.0 8.5 0.15 0.6 8.8 0.05 115.58 3.97 -24.83 9.40 2.31 1.137 kout hcs01 2.6 9.9 1.44 2.2 9.1 1.03 1.8 9.4 0.69 115.71 -1.66 -40.16 6.00 3.73 0.726 kout hcs01 4.1 10.9 0.88 3.5 10.0 0.64 3.0 10.1 0.47 115.82 3.81 -67.34 1.10 6.69 0.133 kout hcs01 7.2 13.3 0.15 6.3 12.1 0.12 5.5 12.0 0.09 116.02 1.65 -8.08 1.10 0.77 0.133 kout hcs01 1.1 9.0 0.27 0.7 8.3 0.11 0.3 8.6 0.02 116.07 4.19 -68.23 0.77 6.81 0.093 kout hcs01 7.3 13.4 0.11 6.4 12.2 0.08 5.6 12.1 0.06 116.14 -1.63 -42.87 1.10 3.98 0.133 kout hcs01 4.4 11.1 0.16 3.7 10.2 0.11 3.2 10.3 0.09 116.16 -0.67 -45.04 1.10 4.19 0.133 kout hcs01 4.6 11.3 0.16 3.9 10.4 0.12 3.4 10.4 0.09 116.34 0.65 -45.85 1.10 4.27 0.133 kout hcs01 4.7 11.4 0.16 4.0 10.4 0.12 3.5 10.5 0.09 116.58 -2.97 -36.61 1.10 3.37 0.133 kout hcs01 3.7 10.7 0.16 3.2 9.8 0.12 2.6 10.0 0.08 116.94 -2.24 -44.51 4.10 4.12 0.496 kout hcs01 4.5 11.3 0.59 3.9 10.3 0.44 3.3 10.4 0.32 117.10 -2.42 -37.92 0.80 3.47 0.097 kout hcs01 3.8 10.8 0.12 3.3 9.9 0.09 2.7 10.0 0.06 117.15 4.78 -7.47 4.70 0.70 0.569 kout hcs01 1.0 9.0 1.16 0.7 8.3 0.57 0.3 8.6 0.10 117.19 5.06 -73.29 1.20 7.48 0.145 kout hcs01 8.0 14.1 0.17 7.0 12.8 0.13 6.1 12.6 0.10 117.26 -0.26 -48.23 1.40 4.49 0.169 kout hcs01 4.9 11.6 0.20 4.2 10.6 0.15 3.6 10.7 0.11 117.43 1.12 -61.56 1.30 5.94 0.157 kout hcs01 6.4 12.8 0.18 5.6 11.7 0.14 4.9 11.6 0.11 117.60 2.32 -45.17 0.99 4.17 0.120 kout hcs01 4.6 11.4 0.15 3.9 10.4 0.10 3.4 10.5 0.08 117.61 0.00 -46.51 1.80 4.30 0.218 kout hcs01 4.7 11.5 0.26 4.0 10.5 0.19 3.5 10.6 0.14 117.72 3.15 -17.43 7.70 1.58 0.932 kout hcs01 1.9 9.5 1.35 1.5 8.8 0.84 1.1 9.1 0.45 118.00 5.00 -14.02 1.30 1.27 0.157 kout hcs01 1.6 9.3 0.25 1.2 8.6 0.14 0.8 8.9 0.06 118.12 1.58 -92.50 0.83 10.41 0.100 kout hcs01 11.2 16.9 0.12 9.8 15.3 0.09 8.4 14.5 0.07 118.46 1.20 -61.22 1.00 5.89 0.121 kout hcs01 6.4 12.8 0.14 5.5 11.7 0.11 4.8 11.6 0.08 118.57 3.62 -5.59 0.77 0.51 0.093 kout hcs01 0.8 8.9 0.23 0.5 8.2 0.09 0.1 8.6 118.62 2.78 -63.24 1.40 6.15 0.169 kout hcs01 6.6 13.0 0.19 5.8 11.9 0.15 5.1 11.8 0.12 118.66 -0.38 -50.16 0.84 4.66 0.102 kout hcs01 5.1 11.8 0.12 4.4 10.8 0.09 3.8 10.8 0.07 118.68 -1.33 -39.03 1.20 3.53 0.145 kout hcs01 3.9 10.9 0.18 3.3 10.0 0.13 2.8 10.1 0.09 118.73 2.90 -67.77 0.92 6.71 0.111 kout hcs01 7.2 13.6 0.13 6.3 12.3 0.10 5.5 12.2 0.07 118.77 3.13 -69.33 1.60 6.92 0.194 kout hcs01 7.4 13.7 0.22 6.5 12.5 0.17 5.7 12.3 0.13 118.90 3.19 -20.17 1.90 1.79 0.230 kout hcs01 2.1 9.7 0.32 1.7 8.9 0.21 1.3 9.2 0.12 119.18 -0.89 -32.94 0.78 2.94 0.094 kout hcs01 3.3 10.5 0.12 2.8 9.7 0.09 2.3 9.8 0.06 119.22 1.71 -62.46 1.40 6.04 0.169 kout hcs01 6.5 13.0 0.20 5.7 11.9 0.15 5.0 11.7 0.12 119.41 1.53 -61.60 1.60 5.93 0.194 kout hcs01 6.4 12.9 0.23 5.6 11.8 0.17 4.9 11.7 0.13 119.42 0.74 -53.88 1.70 5.05 0.206 kout hcs01 5.5 12.2 0.24 4.7 11.1 0.18 4.1 11.1 0.14 119.51 0.39 -50.22 0.86 4.65 0.104 kout hcs01 5.1 11.8 0.13 4.4 10.8 0.09 3.8 10.9 0.07 119.58 3.22 -46.78 2.10 4.30 0.254 kout hcs01 4.7 11.6 0.30 4.0 10.6 0.22 3.5 10.7 0.17 119.60 1.25 -61.49 0.73 5.92 0.088 kout hcs01 6.4 12.9 0.10 5.6 11.8 0.08 4.9 11.7 0.06 119.64 -0.50 -50.36 1.60 4.66 0.194 kout hcs01 5.1 11.9 0.23 4.4 10.9 0.17 3.8 10.9 0.13 119.92 1.95 -68.14 1.00 6.75 0.121 kout hcs01 7.3 13.7 0.14 6.3 12.4 0.11 5.5 12.2 0.08 120.12 -0.18 -49.32 1.20 4.54 0.145 kout hcs01 5.0 11.8 0.18 4.3 10.8 0.13 3.7 10.8 0.10 120.13 1.45 -65.26 1.20 6.38 0.145 kout hcs01 6.9 13.4 0.17 6.0 12.2 0.13 5.2 12.0 0.10 120.13 3.46 -68.99 8.00 6.89 0.968 kout hcs01 7.4 13.8 1.12 6.5 12.6 0.86 5.7 12.3 0.66 120.26 2.89 -18.98 8.40 1.66 1.016 kout hcs01 1.9 9.6 1.33 1.6 8.9 0.94 1.2 9.2 0.53 120.28 2.12 -50.03 3.30 4.62 0.399 kout hcs01 5.0 11.9 0.47 4.3 10.9 0.35 3.8 10.9 0.27 120.30 2.85 -67.89 1.00 6.74 0.121 kout hcs01 7.3 13.7 0.14 6.3 12.5 0.11 5.5 12.3 0.08 120.39 0.13 -48.06 1.80 4.41 0.218 kout hcs01 4.8 11.7 0.26 4.1 10.7 0.19 3.6 10.8 0.15 120.42 3.63 -71.72 0.89 7.26 0.108 kout hcs01 7.8 14.2 0.12 6.8 12.9 0.09 6.0 12.6 0.07 120.48 1.11 -60.01 3.70 5.74 0.448 kout hcs01 6.2 12.8 0.52 5.4 11.7 0.40 4.7 11.6 0.30 120.49 1.78 -62.67 4.90 6.07 0.593 kout hcs01 6.6 13.1 0.70 5.7 11.9 0.52 5.0 11.8 0.40 120.52 3.65 -38.62 1.50 3.47 0.182 kout hcs01 3.8 10.9 0.22 3.3 10.0 0.16 2.8 10.2 0.12 120.70 4.20 -11.55 1.10 1.01 0.133 kout hcs01 1.3 9.2 0.22 0.9 8.5 0.11 0.6 8.8 0.05 120.77 4.98 -9.58 0.63 0.84 0.076 kout hcs01 1.1 9.1 0.13 0.8 8.4 0.07 0.5 8.7 0.03 120.79 -0.38 -46.18 3.30 4.21 0.399 kout hcs01 4.6 11.6 0.48 4.0 10.6 0.36 3.4 10.6 0.26 120.80 1.10 -63.70 6.20 1.100 kout mk88 6.7 13.2 1.28 5.8 12.1 0.96 5.1 11.9 0.74 120.87 1.08 -64.45 3.40 6.29 0.411 kout hcs01 6.8 13.3 0.48 5.9 12.1 0.36 5.1 12.0 0.27 120.93 1.15 -62.64 11.00 6.06 1.331 kout hcs01 6.6 13.1 1.58 5.7 12.0 1.18 5.0 11.8 0.91 121.02 -1.39 -19.65 1.50 1.70 0.182 kout hcs01 2.0 9.7 0.25 1.6 8.9 0.16 1.2 9.2 0.09 121.05 -0.22 -47.23 0.96 4.31 0.116 kout hcs01 4.7 11.7 0.14 4.1 10.7 0.10 3.5 10.7 0.08 121.46 0.78 -59.76 1.20 5.71 0.145 kout hcs01 6.2 12.9 0.17 5.4 11.7 0.13 4.7 11.6 0.10 121.52 3.00 -67.98 0.85 6.77 0.103 kout hcs01 7.3 13.8 0.12 6.4 12.6 0.09 5.6 12.3 0.07 121.54 3.85 -40.17 0.78 3.60 0.094 kout hcs01 4.0 11.1 0.12 3.4 10.2 0.08 2.9 10.3 0.06 121.69 -0.94 -44.70 0.85 4.04 0.103 kout hcs01 4.4 11.5 0.12 3.8 10.5 0.09 3.2 10.6 0.06 121.96 4.10 -67.94 1.70 6.79 0.206 kout hcs01 7.3 13.8 0.24 6.4 12.6 0.18 5.6 12.4 0.14 122.00 0.00 -17.60 1.51 1.175 kout sod91 1.8 9.6 1.67 1.4 8.8 1.01 1.0 9.1 0.52 122.00 3.68 -5.06 1.30 0.43 0.157 kout hcs01 0.7 8.9 0.42 0.4 8.2 0.14 0.1 8.5 0.01 122.13 3.18 -61.28 1.00 5.92 0.121 kout hcs01 6.4 13.1 0.14 5.6 11.9 0.11 4.8 11.8 0.08 122.14 -1.37 -13.85 1.40 1.18 0.169 kout hcs01 1.5 9.4 0.27 1.1 8.6 0.15 0.7 8.9 0.06 122.18 3.00 -60.12 0.71 5.78 0.086 kout hcs01 6.3 13.0 0.10 5.4 11.8 0.08 4.7 11.7 0.06 122.20 -0.87 -42.30 1.20 3.79 0.145 kout hcs01 4.2 11.3 0.18 3.6 10.3 0.13 3.0 10.4 0.09 122.22 2.70 -60.53 1.10 5.83 0.133 kout hcs01 6.3 13.0 0.16 5.5 11.9 0.12 4.8 11.8 0.09 122.26 4.08 -68.55 1.70 6.88 0.206 kout hcs01 7.4 13.9 0.24 6.5 12.7 0.18 5.6 12.5 0.14 122.45 2.62 -55.17 1.20 5.19 0.145 kout hcs01 5.6 12.5 0.17 4.9 11.4 0.13 4.2 11.4 0.09 122.52 1.66 -58.86 0.72 5.62 0.087 kout hcs01 6.1 12.8 0.10 5.3 11.7 0.08 4.6 11.6 0.06 122.53 1.55 -57.22 2.10 5.42 0.254 kout hcs01 5.9 12.7 0.30 5.1 11.6 0.22 4.4 11.5 0.17 122.56 1.74 -96.25 0.89 11.60 0.108 kout hcs01 12.5 18.5 0.13 10.9 16.6 0.10 9.2 15.6 0.07 122.59 -0.62 -19.09 11.00 1.63 1.331 kout hcs01 1.9 9.7 1.81 1.5 8.9 1.13 1.1 9.2 0.61 122.63 2.51 -66.57 5.00 6.60 0.605 kout hcs01 7.1 13.7 0.70 6.2 12.5 0.53 5.4 12.3 0.41 122.80 2.89 -63.95 2.40 6.27 0.290 kout hcs01 6.8 13.4 0.34 5.9 12.2 0.26 5.1 12.1 0.19 122.90 1.36 -55.75 0.72 5.25 0.087 kout hcs01 5.7 12.5 0.10 4.9 11.5 0.08 4.3 11.4 0.06 122.96 3.14 -10.27 1.40 0.87 0.169 kout hcs01 1.1 9.2 0.27 0.8 8.5 0.14 0.5 8.8 0.06 123.06 -6.31 -30.40 1.10 2.20 0.133 stel css90 0.13 0.13 0.13

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 29

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 123.06 -0.78 -44.77 21.00 4.04 2.541 kout hcs01 4.4 11.5 3.01 3.8 10.6 2.25 3.2 10.6 1.59 123.24 3.07 -63.79 1.40 6.26 0.169 kout hcs01 6.8 13.5 0.20 5.9 12.2 0.15 5.1 12.1 0.11 123.45 3.21 -61.50 9.20 5.97 1.113 kout hcs01 6.5 13.2 1.32 5.6 12.0 0.98 4.9 11.9 0.75 123.50 2.00 -66.40 6.40 0.110 kout mk88 7.1 13.8 0.14 6.2 12.5 0.10 5.4 12.3 0.08 123.62 -1.36 -21.23 0.96 1.80 0.116 kout hcs01 2.1 9.8 0.16 1.7 9.0 0.10 1.3 9.3 0.06 123.68 2.86 -63.72 1.80 6.26 0.218 kout hcs01 6.8 13.5 0.26 5.9 12.3 0.19 5.1 12.1 0.14 123.94 -0.12 -44.03 2.30 3.96 0.278 kout hcs01 4.3 11.5 0.33 3.7 10.5 0.24 3.2 10.6 0.18 124.01 1.93 -51.53 0.78 4.78 0.094 kout hcs01 5.2 12.2 0.11 4.5 11.1 0.08 3.9 11.1 0.06 124.12 -0.18 -44.61 1.20 4.02 0.145 kout hcs01 4.4 11.6 0.17 3.8 10.6 0.13 3.2 10.7 0.09 124.26 -0.17 -46.45 0.87 4.21 0.105 kout hcs01 4.6 11.7 0.13 4.0 10.7 0.09 3.4 10.8 0.07 124.28 0.22 -43.59 1.70 3.91 0.206 kout hcs01 4.3 11.5 0.25 3.7 10.5 0.18 3.1 10.6 0.13 124.33 0.50 -46.07 1.70 4.17 0.206 kout hcs01 4.6 11.7 0.25 3.9 10.7 0.18 3.4 10.8 0.14 124.39 1.98 -71.98 2.60 7.42 0.315 kout hcs01 8.0 14.6 0.37 7.0 13.3 0.28 6.0 12.9 0.21 124.60 2.54 -86.91 10.43 0.520 kout bw94 10.7 17.1 0.55 9.4 15.4 0.42 8.0 14.6 0.31 124.60 3.15 -11.01 0.97 0.92 0.117 kout hcs01 1.2 9.2 0.20 0.9 8.5 0.11 0.5 8.8 0.03 124.61 2.50 -87.43 4.70 10.07 0.569 kout hcs01 10.8 17.2 0.65 9.5 15.5 0.51 8.1 14.7 0.37 124.78 2.93 -61.85 1.10 6.05 0.133 kout hcs01 6.5 13.4 0.15 5.7 12.2 0.12 4.9 12.0 0.09 124.94 -0.16 -42.01 0.75 3.75 0.091 kout hcs01 4.1 11.4 0.11 3.5 10.4 0.08 3.0 10.5 0.06 125.08 0.78 -67.75 2.50 6.84 0.303 kout hcs01 7.4 14.1 0.35 6.4 12.8 0.27 5.6 12.5 0.20 125.29 0.58 -65.85 1.20 6.58 0.145 kout hcs01 7.1 13.9 0.17 6.2 12.6 0.13 5.4 12.4 0.10 125.58 2.07 -53.78 4.90 5.06 0.593 kout hcs01 5.5 12.5 0.70 4.7 11.4 0.51 4.1 11.4 0.39 125.78 1.66 -65.47 3.50 6.55 0.424 kout hcs01 7.1 13.9 0.50 6.2 12.6 0.38 5.3 12.4 0.28 126.03 4.37 -7.92 0.79 0.65 0.096 kout hcs01 0.9 9.1 0.18 0.6 8.4 0.08 0.3 8.7 0.02 126.40 -0.79 -11.86 9.70 0.97 1.174 kout hcs01 1.2 9.3 1.80 0.9 8.6 1.01 0.6 8.9 0.45 126.43 -0.24 -57.89 1.50 5.57 0.182 kout hcs01 6.0 13.0 0.21 5.2 11.9 0.16 4.5 11.8 0.12 127.00 -1.00 -11.80 0.96 4.365 kout sod91 1.2 9.3 6.82 0.9 8.6 3.84 0.6 8.8 1.71 127.52 1.86 -80.95 1.40 9.19 0.169 kout hcs01 9.9 16.5 0.20 8.6 14.9 0.15 7.4 14.3 0.11 127.70 -0.11 -49.78 0.82 4.62 0.099 kout hcs01 5.0 12.3 0.12 4.3 11.2 0.09 3.7 11.2 0.06 127.87 1.17 -59.33 0.79 5.81 0.096 kout hcs01 6.3 13.3 0.11 5.5 12.1 0.09 4.7 12.0 0.06 128.30 1.75 -48.24 0.94 4.47 0.114 kout hcs01 4.9 12.1 0.14 4.2 11.1 0.10 3.6 11.1 0.07 128.55 -0.27 -14.33 4.00 1.17 0.484 kout hcs01 1.4 9.4 0.69 1.1 8.7 0.43 0.7 9.0 0.17 128.62 1.22 -51.83 0.92 4.90 0.111 kout hcs01 5.3 12.5 0.13 4.6 11.4 0.10 4.0 11.4 0.07 128.66 1.45 -54.30 0.88 5.20 0.106 kout hcs01 5.7 12.8 0.13 4.9 11.7 0.09 4.2 11.6 0.07 128.76 1.94 -82.04 3.30 9.57 0.399 kout hcs01 10.3 17.0 0.46 9.0 15.3 0.35 7.7 14.6 0.26 128.81 1.33 -83.16 1.60 9.80 0.194 kout hcs01 10.6 17.2 0.23 9.2 15.5 0.17 7.8 14.7 0.12 128.82 0.06 -32.89 1.60 2.84 0.194 kout hcs01 3.2 10.8 0.25 2.7 9.9 0.18 2.2 10.0 0.12 128.99 -0.16 -36.78 0.90 3.23 0.109 kout hcs01 3.6 11.1 0.14 3.0 10.2 0.09 2.5 10.3 0.07 129.16 0.62 -38.81 0.73 3.44 0.088 kout hcs01 3.8 11.3 0.11 3.2 10.4 0.08 2.7 10.4 0.05 129.20 -0.37 -37.55 1.00 3.31 0.121 kout hcs01 3.7 11.2 0.15 3.1 10.3 0.11 2.6 10.4 0.07 129.39 -0.26 -34.45 0.81 3.00 0.098 kout hcs01 3.3 10.9 0.12 2.8 10.0 0.09 2.3 10.2 0.06 130.07 5.08 -14.09 0.64 1.15 0.077 kout hcs01 1.4 9.5 0.11 1.1 8.7 0.07 0.8 9.0 0.04 130.59 1.83 -44.61 3.10 4.11 0.375 kout hcs01 4.5 11.9 0.45 3.9 10.9 0.34 3.3 10.9 0.24 130.66 0.22 -60.08 0.75 6.07 0.091 kout hcs01 6.6 13.7 0.11 5.7 12.5 0.08 4.9 12.3 0.06 131.79 -0.70 -53.83 2.30 5.29 0.278 kout hcs01 5.8 13.1 0.33 5.0 11.9 0.25 4.2 11.8 0.18 131.86 1.33 -78.76 0.76 9.43 0.092 kout hcs01 10.2 17.1 0.11 8.9 15.4 0.08 7.5 14.6 0.06 132.19 -0.88 -55.40 3.80 5.52 0.460 kout hcs01 6.0 13.3 0.54 5.2 12.1 0.41 4.4 11.9 0.29 132.54 -1.62 -37.55 0.84 3.38 0.102 kout hcs01 3.7 11.4 0.12 3.2 10.4 0.09 2.7 10.5 0.07 133.00 0.90 -43.00 6.22 2.50 0.260 stel dlp+96 0.26 0.26 0.26 133.29 0.81 -48.12 0.89 4.63 0.108 kout hcs01 5.1 12.5 0.13 4.4 11.4 0.10 3.7 11.4 0.07 133.37 -0.08 -15.57 1.50 1.27 0.182 kout hcs01 1.5 9.6 0.25 1.2 8.9 0.16 0.9 9.1 0.09 133.37 1.25 -40.68 0.90 3.74 0.109 kout hcs01 4.1 11.7 0.13 3.5 10.7 0.10 3.0 10.8 0.07 133.39 1.01 -42.43 44.00 3.95 5.324 kout hcs01 4.3 11.9 6.31 3.7 10.9 4.67 3.2 10.9 3.49 133.41 0.25 -50.53 19.00 4.95 2.299 kout hcs01 5.4 12.8 2.74 4.6 11.7 1.99 4.0 11.6 1.50 133.47 0.02 -48.27 1.80 4.66 0.218 kout hcs01 5.1 12.6 0.26 4.4 11.5 0.19 3.7 11.4 0.14 133.50 9.00 -15.70 1.31 2.884 kout sod91 1.5 9.6 3.78 1.2 8.9 2.42 1.0 9.2 1.68 133.67 0.62 -44.55 2.80 4.21 0.339 kout hcs01 4.6 12.1 0.40 4.0 11.1 0.31 3.4 11.1 0.22 133.70 1.20 -40.90 7.97 2.50 0.330 stel dlp+96 0.33 0.33 0.33 133.79 1.26 -39.31 1.50 3.60 0.182 kout hcs01 4.0 11.6 0.22 3.4 10.6 0.16 2.9 10.7 0.12 133.90 0.40 -47.60 7.84 2.50 0.330 stel dlp+96 0.33 0.33 0.33 133.90 1.31 -45.17 0.86 4.30 0.104 kout hcs01 4.7 12.2 0.12 4.0 11.2 0.09 3.5 11.2 0.07 134.01 0.65 -48.42 45.00 4.71 5.445 kout hcs01 5.1 12.6 6.38 4.4 11.5 4.75 3.8 11.5 3.54 134.01 0.60 -46.59 1.20 4.48 0.145 kout hcs01 4.9 12.4 0.17 4.2 11.3 0.13 3.6 11.3 0.09 134.10 0.80 -48.40 7.04 2.50 0.290 stel dlp+96 0.29 0.29 0.29 134.29 -1.85 -49.09 1.60 4.82 0.194 kout hcs01 5.3 12.7 0.23 4.5 11.6 0.17 3.8 11.5 0.12 134.42 -1.62 -47.62 1.00 4.63 0.121 kout hcs01 5.1 12.6 0.15 4.4 11.5 0.11 3.7 11.4 0.08 134.45 -0.14 -13.81 1.80 1.12 0.218 kout hcs01 1.4 9.5 0.34 1.1 8.8 0.21 0.7 9.0 0.09 134.48 2.20 -30.92 0.68 2.72 0.082 kout hcs01 3.0 10.8 0.10 2.6 10.0 0.07 2.1 10.1 0.05 134.72 -0.68 -42.90 3.10 4.06 0.375 kout hcs01 4.4 12.1 0.44 3.8 11.0 0.33 3.2 11.0 0.23 134.84 1.41 -40.94 0.76 3.83 0.092 kout hcs01 4.2 11.8 0.11 3.6 10.8 0.08 3.1 10.9 0.06 134.91 1.59 -39.22 0.69 3.63 0.083 kout hcs01 4.0 11.7 0.10 3.4 10.7 0.07 2.9 10.7 0.05 135.16 -0.06 -45.02 2.10 4.34 0.254 kout hcs01 4.7 12.3 0.30 4.1 11.3 0.23 3.5 11.2 0.17 135.24 -0.38 -41.78 1.30 3.95 0.157 kout hcs01 4.3 12.0 0.19 3.7 11.0 0.14 3.1 11.0 0.10 135.27 1.06 -45.42 1.90 4.40 0.230 kout hcs01 4.8 12.4 0.27 4.1 11.3 0.20 3.5 11.3 0.15 136.30 0.19 -57.26 1.70 6.16 0.206 kout hcs01 6.7 14.1 0.24 5.8 12.8 0.18 4.9 12.5 0.13 136.34 -1.72 -10.78 1.20 0.87 0.145 kout hcs01 1.1 9.3 0.23 0.8 8.6 0.12 0.5 8.9 0.05 136.34 0.85 -74.35 1.30 9.44 0.157 kout hcs01 10.2 17.4 0.18 8.9 15.7 0.14 7.5 14.8 0.10 136.50 1.20 -36.40 4.40 2.50 0.180 stel dlp+96 0.18 0.18 0.18 136.62 0.34 -56.80 0.94 6.13 0.114 kout hcs01 6.7 14.1 0.14 5.8 12.8 0.10 4.9 12.5 0.07 136.70 1.23 -36.88 15.00 3.44 1.815 kout hcs01 3.8 11.6 2.21 3.2 10.6 1.57 2.7 10.7 1.12 136.79 0.44 -59.57 1.70 6.61 0.206 kout hcs01 7.2 14.6 0.24 6.2 13.2 0.18 5.3 12.9 0.13 136.88 0.26 -56.82 1.30 6.16 0.157 kout hcs01 6.7 14.1 0.19 5.8 12.9 0.14 4.9 12.6 0.10 136.92 1.16 -40.47 8.70 3.87 1.053 kout hcs01 4.3 12.0 1.30 3.6 10.9 0.91 3.1 11.0 0.68 137.00 1.30 -38.50 9.19 2.50 0.380 stel dlp+96 0.38 0.38 0.38

30 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 137.15 3.13 -50.96 0.92 5.31 0.111 kout hcs01 5.8 13.3 0.13 5.0 12.1 0.10 4.3 12.0 0.07 137.22 1.36 -40.13 0.92 3.85 0.111 kout hcs01 4.2 12.0 0.13 3.6 10.9 0.10 3.1 11.0 0.07 137.35 1.80 -38.36 1.20 3.64 0.145 kout hcs01 4.0 11.8 0.18 3.4 10.8 0.13 2.9 10.8 0.09 137.70 1.50 -38.90 3.86 2.50 0.160 stel dlp+96 0.16 0.16 0.16 137.72 -0.71 -45.39 0.81 4.56 0.098 kout hcs01 5.0 12.6 0.12 4.3 11.5 0.09 3.6 11.4 0.06 137.72 4.18 -9.85 0.93 0.80 0.113 kout hcs01 1.0 9.3 0.18 0.8 8.6 0.11 0.5 8.9 0.04 137.76 -0.97 -103.73 1.60 21.60 0.194 kout hcs01 23.5 30.4 0.23 20.3 26.8 0.17 15. 22. 0.09 137.95 1.72 -42.72 0.83 4.22 0.100 kout hcs01 4.6 12.3 0.12 4.0 11.3 0.09 3.4 11.2 0.06 138.00 4.00 -9.80 0.80 0.170 kout sod91 1.0 9.3 0.27 0.7 8.6 0.13 0.5 8.9 0.07 138.00 2.50 -11.80 0.97 0.224 kout sod91 1.2 9.4 0.34 0.9 8.7 0.19 0.6 9.0 0.09 138.29 2.42 -12.60 1.20 1.04 0.145 kout hcs01 1.3 9.5 0.23 1.0 8.8 0.13 0.7 9.0 0.07 138.38 -2.14 -46.63 1.20 4.79 0.145 kout hcs01 5.2 12.9 0.17 4.5 11.7 0.13 3.8 11.6 0.09 138.50 1.60 -38.70 4.84 2.50 0.200 stel dlp+96 0.20 0.20 0.20 138.52 -0.81 -45.75 2.50 4.67 0.303 kout hcs01 5.1 12.8 0.36 4.4 11.7 0.27 3.7 11.5 0.19 138.58 1.74 -37.92 0.98 3.66 0.119 kout hcs01 4.0 11.8 0.14 3.4 10.8 0.10 2.9 10.9 0.07 138.66 5.16 -15.38 1.20 1.30 0.145 kout hcs01 1.5 9.7 0.19 1.2 9.0 0.12 0.9 9.2 0.07 139.20 1.00 -39.60 1.71 2.50 0.071 stel dlp+96 0.07 0.07 0.07 139.22 2.71 -51.19 0.73 5.56 0.088 kout hcs01 6.0 13.7 0.10 5.2 12.4 0.08 4.5 12.2 0.06 139.24 -2.57 -13.87 0.79 1.16 0.096 kout hcs01 1.4 9.6 0.14 1.1 8.9 0.09 0.8 9.1 0.05 139.24 1.01 -39.86 1.90 3.94 0.230 kout hcs01 4.3 12.1 0.27 3.7 11.1 0.20 3.1 11.1 0.14 139.31 -2.05 -48.73 4.00 5.18 0.484 kout hcs01 5.6 13.3 0.57 4.9 12.1 0.43 4.1 11.9 0.30 139.36 2.87 -53.02 1.00 5.87 0.121 kout hcs01 6.4 14.0 0.14 5.5 12.7 0.11 4.7 12.5 0.08 139.41 -0.40 -37.07 0.92 3.59 0.111 kout hcs01 4.0 11.8 0.14 3.4 10.8 0.10 2.8 10.8 0.07 139.42 -1.50 -49.59 0.97 5.32 0.117 kout hcs01 5.8 13.4 0.14 5.0 12.2 0.10 4.2 12.0 0.07 139.53 -2.81 -15.26 0.73 1.29 0.088 kout hcs01 1.5 9.7 0.12 1.2 9.0 0.08 0.9 9.2 0.04 139.72 -0.56 -39.45 0.78 3.92 0.094 kout hcs01 4.3 12.1 0.11 3.7 11.1 0.08 3.1 11.0 0.06 139.90 0.22 -40.16 2.20 4.02 0.266 kout hcs01 4.4 12.2 0.32 3.8 11.2 0.24 3.2 11.1 0.17 139.91 2.61 -50.80 0.77 5.58 0.093 kout hcs01 6.1 13.7 0.11 5.2 12.5 0.08 4.5 12.3 0.06 140.27 2.11 -12.63 3.30 1.06 0.399 kout hcs01 1.3 9.5 0.60 1.0 8.8 0.36 0.7 9.1 0.17 140.27 1.52 -15.42 0.66 1.31 0.080 kout hcs01 1.5 9.7 0.10 1.2 9.0 0.07 0.9 9.2 0.04 140.27 3.48 -9.92 0.73 0.82 0.088 kout hcs01 1.0 9.3 0.13 0.8 8.6 0.08 0.5 8.9 0.03 140.41 4.38 -13.06 0.75 1.11 0.091 kout hcs01 1.3 9.6 0.12 1.0 8.8 0.07 0.8 9.1 0.05 140.46 0.80 -36.46 0.79 3.58 0.096 kout hcs01 3.9 11.8 0.11 3.4 10.8 0.09 2.8 10.8 0.06 140.60 -0.10 -39.20 3.22 2.50 0.140 stel dlp+96 0.14 0.14 0.14 140.60 0.70 -37.90 4.06 2.50 0.170 stel dlp+96 0.17 0.17 0.17 140.68 4.94 -14.22 0.80 1.22 0.097 kout hcs01 1.4 9.7 0.13 1.1 8.9 0.08 0.9 9.2 0.05 140.73 -0.98 -38.56 0.96 3.87 0.116 kout hcs01 4.3 12.1 0.14 3.6 11.1 0.10 3.1 11.0 0.07 140.73 0.82 -38.44 2.70 3.86 0.327 kout hcs01 4.2 12.1 0.39 3.6 11.0 0.28 3.1 11.0 0.21 140.77 -0.16 -41.09 0.71 4.21 0.086 kout hcs01 4.6 12.4 0.10 4.0 11.3 0.08 3.3 11.3 0.05 140.85 -0.82 -40.95 1.90 4.20 0.230 kout hcs01 4.6 12.4 0.28 3.9 11.3 0.20 3.3 11.3 0.14 140.90 -1.10 -40.40 5.61 2.50 0.240 stel dlp+96 0.24 0.24 0.24 141.00 5.50 -11.10 0.94 0.794 kout sod91 1.1 9.4 1.09 0.9 8.7 0.73 0.6 9.0 0.32 141.46 -1.18 -40.79 4.60 4.23 0.557 kout hcs01 4.6 12.5 0.66 4.0 11.4 0.50 3.3 11.3 0.34 141.50 -1.20 -40.80 3.31 2.50 0.140 stel dlp+96 0.14 0.14 0.14 142.00 1.00 -15.70 1.37 4.467 kout sod91 1.6 9.8 6.09 1.3 9.0 4.02 1.0 9.3 2.38 143.80 -1.50 -32.20 1.98 2.50 0.083 stel dlp+96 0.08 0.08 0.08 145.20 2.99 -58.39 8.59 0.150 kout bw94 8.9 16.6 0.16 7.7 15.0 0.12 6.5 14.3 0.09 145.30 -0.25 -67.60 2.40 11.00 0.120 kout dgt94 11.8 19.4 0.14 10.2 17.4 0.10 8.3 16.1 0.07 145.40 -0.10 -70.60 1.70 12.00 0.087 kout dgt94 13.0 20.5 0.10 11.2 18.4 0.08 9.1 16.8 0.05 146.95 0.80 -67.30 2.70 12.00 0.140 kout dgt94 12.7 20.3 0.16 11.0 18.2 0.12 8.9 16.7 0.08 148.90 0.90 -59.60 3.80 10.00 0.200 kout dgt94 10.9 18.7 0.24 9.4 16.8 0.18 7.8 15.7 0.12 150.15 1.10 -55.90 2.10 10.00 0.110 kout dgt94 10.3 18.2 0.12 8.9 16.3 0.09 7.4 15.3 0.06 151.23 1.02 -53.86 9.91 0.140 kout bw94 10.2 18.1 0.15 8.8 16.3 0.11 7.3 15.3 0.08 151.50 -1.00 -30.60 3.82 10.471 kout sod91 4.2 12.4 12.66 3.6 11.3 9.30 3.0 11.2 6.46 154.00 -2.00 -14.40 1.63 2.188 kout sod91 1.9 10.2 2.97 1.5 9.4 1.85 1.2 9.6 1.19 154.35 2.61 -35.80 7.40 6.00 0.895 stel css90 0.89 0.89 0.89 154.64 2.45 -38.70 3.00 6.00 0.363 stel css90 0.36 0.36 0.36 156.89 0.21 -47.44 11.33 0.140 kout bw94 11.7 19.8 0.15 10.1 17.7 0.11 8.2 16.3 0.07 173.71 2.70 -17.40 7.60 1.80 0.920 stel css90 1.8 10.3 0.92 1.8 9.8 0.92 189.03 0.78 2.90 2.20 1.50 0.266 stel css90 1.5 10.0 0.27 1.5 9.5 0.27 190.05 0.53 8.40 0.88 1.50 0.106 stel css90 1.5 10.0 0.11 1.5 9.5 0.11 194.00 -0.50 20.90 5.90 2.800 kout mab97 6.1 14.5 2.99 5.3 13.2 2.26 4.5 13.0 1.63 194.25 -0.50 20.00 5.40 1.520 kout mab97 5.5 13.9 1.58 4.8 12.7 1.20 4.1 12.5 0.88 194.50 -1.26 14.40 3.20 0.210 kout mab97 3.4 11.8 0.24 2.9 10.8 0.17 2.5 11.0 0.13 194.50 -1.00 22.60 6.40 0.560 kout mab97 6.6 15.0 0.60 5.7 13.6 0.44 4.9 13.3 0.33 195.50 0.00 20.40 4.90 0.190 kout mab97 5.1 13.4 0.21 4.3 12.2 0.15 3.7 12.1 0.11 195.75 -0.13 32.60 11.00 1.920 kout mab97 11.3 19.6 2.03 9.8 17.6 1.52 8.1 16.4 1.04 196.00 0.50 20.20 4.60 0.480 kout mab97 4.8 13.2 0.52 4.1 12.0 0.38 3.5 11.9 0.28 196.45 -1.68 17.70 3.00 3.80 0.363 stel css90 0.36 0.36 0.36 196.83 -3.10 25.30 1.10 4.80 0.133 stel css90 0.13 0.13 0.13 197.00 0.75 19.60 4.00 0.890 kout mab97 4.2 12.6 0.98 3.6 11.5 0.72 3.1 11.5 0.53 203.00 1.00 32.40 5.70 0.200 kout mab97 5.9 14.1 0.21 5.1 12.8 0.16 4.3 12.6 0.11 204.50 -0.50 26.80 4.00 0.190 kout mab97 4.1 12.4 0.20 3.5 11.3 0.15 3.0 11.3 0.11 204.63 0.13 45.70 9.30 0.300 kout mab97 9.6 17.7 0.32 8.3 15.9 0.24 7.0 15.1 0.17 205.00 0.75 33.30 5.30 0.620 kout mab97 5.5 13.7 0.67 4.7 12.5 0.49 4.0 12.3 0.35 205.25 0.00 20.70 2.70 0.110 kout mab97 2.9 11.2 0.13 2.4 10.3 0.09 2.1 10.4 0.07 206.00 -0.50 20.70 2.60 0.090 kout mab97 2.8 11.1 0.10 2.4 10.2 0.08 2.0 10.3 0.05 207.50 0.25 34.40 4.90 0.230 kout mab97 5.1 13.3 0.25 4.4 12.1 0.19 3.8 12.0 0.14 207.75 1.00 39.50 6.00 0.150 kout mab97 6.3 14.3 0.17 5.4 13.0 0.12 4.6 12.7 0.09 208.50 0.75 39.20 5.70 0.350 kout mab97 6.0 14.0 0.39 5.1 12.8 0.28 4.4 12.5 0.21 208.75 -1.75 51.10 8.90 0.590 kout mab97 9.2 17.2 0.63 8.0 15.5 0.48 6.8 14.8 0.34 209.50 -1.25 24.90 2.90 0.140 kout mab97 3.1 11.3 0.16 2.6 10.4 0.11 2.3 10.5 0.09 209.50 -1.00 44.90 6.90 0.260 kout mab97 7.1 15.1 0.28 6.1 13.7 0.20 5.2 13.3 0.15

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 31

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 209.50 0.50 29.80 3.70 0.370 kout mab97 3.9 12.1 0.41 3.3 11.0 0.29 2.8 11.1 0.21 210.00 -2.25 22.20 2.50 0.130 kout mab97 2.7 10.9 0.15 2.3 10.0 0.11 1.9 10.2 0.08 210.00 -0.75 35.00 4.60 0.280 kout mab97 4.8 12.9 0.30 4.1 11.7 0.22 3.5 11.7 0.16 210.13 -1.75 39.80 5.50 0.300 kout mab97 5.7 13.7 0.32 4.9 12.5 0.24 4.2 12.4 0.17 210.13 -1.50 37.80 5.10 0.180 kout mab97 5.3 13.4 0.19 4.6 12.2 0.15 3.9 12.1 0.11 210.38 0.00 35.90 4.70 1.010 kout mab97 4.9 12.9 1.10 4.2 11.8 0.81 3.6 11.7 0.59 211.04 1.18 54.29 8.88 0.140 kout bw94 9.1 17.0 0.15 7.9 15.3 0.11 6.6 14.6 0.08 211.25 -1.75 42.20 5.80 0.350 kout mab97 6.0 14.0 0.37 5.2 12.7 0.28 4.4 12.5 0.20 211.25 -1.00 43.80 6.10 0.180 kout mab97 6.3 14.3 0.19 5.5 13.0 0.15 4.7 12.7 0.11 211.25 -0.50 21.70 2.40 0.090 kout mab97 2.5 10.7 0.10 2.1 9.9 0.07 1.8 10.1 0.05 211.50 1.00 45.40 6.40 1.190 kout mab97 6.6 14.6 1.27 5.7 13.2 0.94 4.9 12.9 0.70 212.25 -1.00 27.50 3.10 0.150 kout mab97 3.3 11.4 0.17 2.8 10.4 0.12 2.4 10.6 0.09 212.25 -1.00 44.30 6.00 1.110 kout mab97 6.2 14.1 1.19 5.3 12.8 0.87 4.6 12.6 0.65 213.00 1.25 42.90 5.50 1.040 kout mab97 5.8 13.7 1.16 5.0 12.5 0.86 4.2 12.3 0.61 213.25 -2.00 37.10 4.50 0.210 kout mab97 4.7 12.7 0.23 4.0 11.6 0.17 3.5 11.6 0.13 214.00 0.75 44.10 5.60 0.940 kout mab97 5.8 13.7 1.01 5.0 12.5 0.75 4.3 12.3 0.55 214.50 -1.75 27.60 2.90 0.390 kout mab97 3.1 11.2 0.45 2.6 10.3 0.31 2.2 10.4 0.22 214.50 1.00 46.00 5.90 1.130 kout mab97 6.1 13.9 1.21 5.2 12.7 0.88 4.5 12.4 0.66 215.00 1.00 47.60 6.10 2.480 kout mab97 6.3 14.1 2.65 5.4 12.8 1.94 4.6 12.6 1.41 215.25 -0.25 29.20 3.10 0.400 kout mab97 3.3 11.3 0.45 2.8 10.4 0.33 2.4 10.5 0.24 215.50 -2.25 43.40 5.20 0.100 kout mab97 5.4 13.3 0.11 4.7 12.1 0.08 4.1 12.0 0.06 215.50 0.25 48.70 6.20 0.520 kout mab97 6.4 14.2 0.55 5.5 12.9 0.41 4.7 12.7 0.30 215.75 1.25 50.70 6.50 0.720 kout mab97 6.8 14.5 0.79 5.9 13.2 0.59 5.0 12.9 0.43 216.00 0.50 45.70 5.50 0.180 kout mab97 5.8 13.6 0.20 5.0 12.4 0.15 4.2 12.2 0.10 216.25 0.00 28.20 2.90 0.100 kout mab97 3.1 11.1 0.11 2.6 10.2 0.08 2.2 10.3 0.06 216.50 0.50 46.70 5.70 0.130 kout mab97 5.9 13.7 0.14 5.1 12.4 0.10 4.3 12.3 0.07 216.50 1.25 48.00 5.90 0.580 kout mab97 6.1 13.9 0.62 5.3 12.6 0.47 4.5 12.4 0.34 216.50 -2.50 22.80 2.14 12.303 kout sod91 2.4 10.5 15.47 2.0 9.7 10.75 1.7 9.9 7.76 216.75 -1.00 31.30 3.30 0.140 kout mab97 3.4 11.4 0.15 2.9 10.5 0.11 2.5 10.6 0.08 217.00 0.50 50.90 6.30 1.340 kout mab97 6.6 14.3 1.47 5.7 13.0 1.10 4.8 12.7 0.78 217.13 -0.13 53.80 6.90 0.220 kout mab97 7.1 14.8 0.23 6.2 13.4 0.18 5.3 13.1 0.13 217.25 0.00 26.70 2.70 0.700 kout mab97 2.8 10.9 0.75 2.4 10.0 0.55 2.0 10.2 0.38 217.25 0.00 27.70 2.80 0.360 kout mab97 3.0 11.0 0.41 2.5 10.1 0.29 2.1 10.3 0.20 217.38 -1.38 50.50 6.20 0.280 kout mab97 6.4 14.2 0.30 5.5 12.9 0.22 4.8 12.6 0.17 217.38 0.25 50.50 6.20 1.550 kout mab97 6.4 14.1 1.65 5.5 12.9 1.22 4.8 12.6 0.93 218.00 -0.25 27.70 2.70 0.630 kout mab97 2.9 11.0 0.73 2.5 10.1 0.54 2.1 10.2 0.38 218.00 0.25 22.80 2.20 0.200 kout mab97 2.4 10.5 0.24 2.0 9.6 0.17 1.6 9.8 0.11 218.25 -2.00 26.30 2.60 0.360 kout mab97 2.7 10.8 0.39 2.3 9.9 0.28 2.0 10.1 0.21 218.25 -2.00 32.30 3.30 0.720 kout mab97 3.5 11.4 0.81 3.0 10.5 0.60 2.5 10.6 0.41 218.75 -0.50 56.10 7.00 0.170 kout mab97 7.3 14.9 0.18 6.3 13.5 0.14 5.4 13.1 0.10 218.75 -0.50 59.60 7.80 0.220 kout mab97 8.0 15.6 0.23 6.9 14.1 0.17 5.9 13.6 0.13 219.00 -1.88 31.30 3.10 0.290 kout mab97 3.3 11.3 0.33 2.8 10.3 0.24 2.4 10.5 0.17 219.75 -2.00 30.90 3.00 0.210 kout mab97 3.2 11.2 0.24 2.7 10.2 0.17 2.3 10.4 0.12 220.25 -2.00 33.80 3.40 0.310 kout mab97 3.6 11.5 0.35 3.0 10.5 0.24 2.6 10.6 0.18 221.75 0.25 63.80 8.00 0.200 kout mab97 8.2 15.6 0.21 7.2 14.2 0.16 6.1 13.7 0.12 222.50 -0.25 51.30 5.60 0.160 kout mab97 5.9 13.4 0.18 5.1 12.2 0.13 4.3 12.1 0.09 222.75 -2.00 39.70 4.00 0.290 kout mab97 4.2 11.9 0.32 3.6 10.9 0.23 3.1 11.0 0.17 223.75 -2.00 63.20 7.50 0.190 kout mab97 7.8 15.1 0.21 6.7 13.7 0.15 5.8 13.3 0.11 224.00 -2.00 17.60 1.47 4.677 kout sod91 1.7 9.8 6.26 1.4 9.0 4.24 1.1 9.3 2.62 228.00 -1.00 36.50 3.40 0.110 kout mab97 3.6 11.2 0.12 3.1 10.3 0.09 2.6 10.4 0.06 229.75 -2.50 41.30 3.90 0.120 kout mab97 4.1 11.6 0.13 3.5 10.6 0.10 3.0 10.7 0.07 230.00 -1.00 39.20 3.70 0.230 kout mab97 3.9 11.4 0.26 3.3 10.4 0.18 2.8 10.5 0.13 230.25 -2.75 42.00 4.00 0.380 kout mab97 4.2 11.6 0.42 3.6 10.6 0.31 3.1 10.7 0.23 231.13 0.00 43.40 4.10 0.210 kout mab97 4.3 11.7 0.23 3.7 10.7 0.17 3.2 10.8 0.13 231.50 -1.00 43.10 4.10 0.910 kout mab97 4.3 11.6 1.00 3.7 10.7 0.74 3.2 10.7 0.55 232.00 0.13 57.20 5.80 0.360 kout mab97 6.0 13.1 0.39 5.2 11.9 0.29 4.5 11.8 0.22 232.00 -2.50 42.30 3.81 14.454 kout sod91 4.2 11.6 17.56 3.6 10.6 12.90 3.1 10.7 9.57 232.25 -1.00 44.60 4.20 0.370 kout mab97 4.4 11.7 0.41 3.8 10.8 0.30 3.3 10.8 0.23 232.75 -3.25 40.60 3.80 0.790 kout mab97 4.0 11.4 0.88 3.4 10.4 0.63 2.9 10.5 0.46 233.00 -1.00 47.00 4.50 0.410 kout mab97 4.7 11.9 0.45 4.0 10.9 0.32 3.5 11.0 0.25 233.00 -0.75 45.60 4.30 1.430 kout mab97 4.5 11.8 1.57 3.9 10.8 1.18 3.4 10.9 0.89 233.00 0.00 18.90 1.57 1.549 kout sod91 1.8 9.7 2.04 1.5 9.0 1.41 1.1 9.2 0.76 233.25 -1.75 51.60 5.00 0.160 kout mab97 5.3 12.4 0.18 4.5 11.3 0.13 3.9 11.3 0.10 234.00 -0.25 43.70 4.10 1.930 kout mab97 4.3 11.6 2.12 3.7 10.6 1.57 3.2 10.7 1.18 234.25 -0.88 76.30 8.60 0.930 kout mab97 8.8 15.4 0.97 7.7 14.0 0.75 6.7 13.5 0.56 234.50 -0.25 43.40 4.10 1.540 kout mab97 4.3 11.5 1.69 3.7 10.6 1.25 3.2 10.6 0.94 235.00 0.50 47.90 4.60 0.160 kout mab97 4.8 11.9 0.17 4.1 10.9 0.13 3.6 10.9 0.10 235.38 -1.75 80.80 9.30 0.950 kout mab97 9.5 16.0 0.99 8.3 14.4 0.76 7.2 13.9 0.57 235.50 0.75 48.30 4.60 0.160 kout mab97 4.8 11.9 0.17 4.2 10.9 0.13 3.6 10.9 0.10 235.75 -1.50 52.60 5.10 0.190 kout mab97 5.3 12.3 0.21 4.6 11.3 0.15 4.0 11.3 0.12 236.38 -1.75 77.60 8.60 1.230 kout mab97 8.9 15.3 1.32 7.7 13.9 0.99 6.7 13.4 0.75 236.38 -1.50 29.20 2.60 0.200 kout mab97 2.8 10.3 0.23 2.4 9.5 0.17 2.0 9.7 0.12 236.75 -0.50 56.60 5.60 0.130 kout mab97 5.8 12.7 0.14 5.0 11.5 0.10 4.4 11.5 0.08 237.00 -2.00 23.20 2.10 0.190 kout mab97 2.3 9.9 0.23 1.9 9.1 0.16 1.5 9.4 0.10 237.13 -2.38 57.10 5.60 0.260 kout mab97 5.9 12.7 0.29 5.1 11.6 0.22 4.5 11.5 0.17 237.25 -1.25 74.40 8.00 1.050 kout mab97 8.3 14.7 1.13 7.2 13.4 0.85 6.3 13.0 0.65 237.50 -0.25 55.90 5.50 0.180 kout mab97 5.7 12.5 0.19 4.9 11.4 0.14 4.3 11.4 0.11 237.75 -1.00 22.40 2.00 0.260 kout mab97 2.2 9.9 0.31 1.8 9.1 0.21 1.4 9.3 0.13 238.38 -3.25 65.20 6.70 0.490 kout mab97 6.9 13.5 0.52 6.0 12.3 0.39 5.3 12.1 0.31 239.13 -3.50 23.00 2.10 0.190 kout mab97 2.3 9.9 0.23 1.9 9.1 0.16 1.5 9.4 0.10 239.13 -1.88 83.00 9.40 2.460 kout mab97 9.6 15.8 2.57 8.4 14.3 1.96 7.3 13.8 1.48 239.50 -1.88 79.90 8.80 0.410 kout mab97 9.1 15.3 0.44 7.9 13.8 0.33 6.9 13.4 0.25 240.25 -1.75 23.90 2.20 0.180 kout mab97 2.4 9.9 0.21 2.0 9.1 0.15 1.6 9.4 0.10

32 L. G. Hou et al.: The spiral structure of our Milky Way Galaxy

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 240.25 0.00 68.10 7.00 0.340 kout mab97 7.3 13.7 0.37 6.3 12.4 0.28 5.5 12.2 0.21 240.25 0.50 68.70 7.10 0.230 kout mab97 7.4 13.7 0.25 6.4 12.5 0.19 5.6 12.3 0.14 241.00 -1.25 66.10 6.80 2.760 kout mab97 7.0 13.4 2.92 6.1 12.2 2.22 5.3 12.0 1.68 241.75 -0.63 68.40 7.10 3.350 kout mab97 7.3 13.6 3.54 6.4 12.4 2.72 5.6 12.2 2.08 242.00 -0.88 66.00 6.70 1.720 kout mab97 7.0 13.3 1.88 6.1 12.1 1.43 5.3 12.0 1.08 242.25 -2.75 21.50 2.00 0.190 kout mab97 2.2 9.7 0.23 1.8 9.0 0.15 1.4 9.3 0.09 242.25 -2.75 26.20 2.40 0.320 kout mab97 2.7 10.0 0.41 2.2 9.2 0.27 1.8 9.5 0.18 242.25 0.13 69.80 7.20 1.720 kout mab97 7.5 13.7 1.87 6.5 12.5 1.40 5.7 12.3 1.08 242.63 0.13 71.90 7.50 1.210 kout mab97 7.8 13.9 1.31 6.8 12.7 0.99 5.9 12.4 0.75 242.88 -0.50 64.30 6.50 1.580 kout mab97 6.8 13.1 1.73 5.9 11.9 1.30 5.2 11.8 1.01 242.88 0.00 55.80 5.50 0.500 kout mab97 5.7 12.2 0.54 5.0 11.2 0.41 4.4 11.2 0.32 243.00 -3.00 22.20 2.10 0.170 kout mab97 2.3 9.8 0.20 1.9 9.0 0.14 1.5 9.3 0.09 243.25 -0.75 66.90 6.90 0.760 kout mab97 7.1 13.3 0.80 6.2 12.1 0.61 5.4 12.0 0.47 244.25 -2.50 70.40 7.30 0.130 kout mab97 7.6 13.6 0.14 6.6 12.4 0.11 5.8 12.2 0.08 244.50 -2.00 92.60 10.80 0.750 kout mab97 11.1 16.6 0.79 9.7 15.0 0.61 8.4 14.3 0.45 244.75 -0.25 62.50 6.30 0.190 kout mab97 6.6 12.8 0.21 5.7 11.7 0.16 5.0 11.6 0.12 246.75 -0.50 21.40 2.10 0.620 kout mab97 2.4 9.7 0.81 1.9 8.9 0.51 1.5 9.2 0.32 247.75 -0.75 29.90 3.00 0.090 kout mab97 3.2 10.2 0.10 2.7 9.4 0.07 2.3 9.6 0.05 248.00 0.50 27.00 2.70 0.230 kout mab97 3.0 10.0 0.28 2.5 9.2 0.20 2.0 9.4 0.13 249.50 -3.88 89.90 10.20 0.480 kout mab97 10.6 15.7 0.52 9.3 14.2 0.40 8.2 13.7 0.31 249.88 -3.13 98.00 11.60 1.500 kout mab97 12.0 16.9 1.61 10.5 15.2 1.23 9.2 14.5 0.94 250.38 -1.00 66.40 7.00 0.200 kout mab97 7.3 12.9 0.22 6.4 11.8 0.17 5.7 11.7 0.13 250.63 -3.63 89.60 10.20 0.320 kout mab97 10.5 15.6 0.34 9.2 14.1 0.26 8.2 13.6 0.21 251.25 -2.00 54.80 5.70 0.260 kout mab97 6.0 11.9 0.29 5.2 10.9 0.22 4.6 10.9 0.17 252.00 -3.50 8.50 1.00 0.093 kout sod91 1.4 9.0 0.18 0.9 8.3 0.08 0.5 8.7 0.02 252.00 -3.50 15.00 1.68 0.891 kout sod91 2.0 9.3 1.26 1.6 8.6 0.81 1.1 8.9 0.38 252.08 -4.24 95.14 11.22 0.100 kout bw94 11.5 16.3 0.11 10.1 14.7 0.08 8.9 14.1 0.06 253.00 -2.93 99.60 0.91 11.50 0.111 kout nomf05 12.3 16.8 0.13 10.8 15.2 0.10 9.5 14.5 0.08 253.00 -1.50 5.90 0.74 0.263 kout sod91 1.1 8.9 0.58 0.7 8.2 0.24 0.2 8.6 0.02 253.23 -2.73 98.90 0.99 11.30 0.121 kout nomf05 12.1 16.7 0.14 10.7 15.1 0.11 9.4 14.4 0.08 253.53 -3.17 107.20 0.94 12.80 0.114 kout nomf05 13.7 18.1 0.13 12.1 16.3 0.10 10.6 15.3 0.08 253.63 0.00 34.70 3.80 2.640 kout mab97 4.1 10.4 3.07 3.5 9.6 2.24 3.0 9.8 1.65 253.75 0.00 34.60 3.80 1.690 kout mab97 4.1 10.4 1.97 3.5 9.6 1.43 3.0 9.8 1.05 254.25 -2.25 36.10 4.00 0.350 kout mab97 4.3 10.5 0.40 3.6 9.6 0.28 3.2 9.8 0.22 254.25 -1.00 76.60 8.50 0.330 kout mab97 8.8 13.8 0.35 7.7 12.5 0.27 6.9 12.3 0.22 255.25 -1.00 80.10 9.00 1.180 kout mab97 9.3 14.1 1.26 8.2 12.8 0.98 7.3 12.6 0.78 255.38 -0.75 86.00 9.90 1.440 kout mab97 10.1 14.8 1.50 8.9 13.4 1.16 8.0 13.0 0.94 255.47 -3.93 108.70 2.85 13.20 0.348 kout nomf05 14.1 18.2 0.40 12.4 16.4 0.31 10.9 15.4 0.24 255.75 -1.00 35.70 4.10 0.150 kout mab97 4.3 10.4 0.16 3.7 9.6 0.12 3.2 9.8 0.09 256.00 -2.50 9.80 1.31 1.738 kout sod91 1.7 9.1 2.93 1.2 8.4 1.46 0.7 8.7 0.50 256.12 -1.50 87.50 10.10 0.950 kout mab97 10.4 14.9 1.01 9.2 13.5 0.79 8.2 13.2 0.63 256.72 -2.00 44.40 5.00 0.280 kout mab97 5.3 11.0 0.31 4.6 10.1 0.24 4.1 10.2 0.19 257.00 -0.50 53.00 6.00 0.810 kout mab97 6.2 11.6 0.86 5.4 10.6 0.66 4.8 10.7 0.52 257.37 -1.10 90.90 1.55 10.30 0.190 kout nomf05 11.0 15.3 0.22 9.7 13.9 0.17 8.7 13.4 0.14 257.50 -2.38 93.10 11.10 1.100 kout mab97 11.4 15.6 1.16 10.0 14.1 0.89 9.0 13.6 0.72 257.50 -2.00 41.50 4.80 0.380 kout mab97 5.1 10.8 0.43 4.4 9.9 0.32 3.9 10.1 0.25 257.50 -0.25 55.50 6.30 0.190 kout mab97 6.5 11.8 0.20 5.7 10.8 0.16 5.1 10.8 0.12 257.53 -2.33 94.80 6.84 10.90 0.836 kout nomf05 11.6 15.8 0.95 10.3 14.3 0.75 9.2 13.8 0.60 257.57 -2.07 91.30 5.02 10.40 0.613 kout nomf05 11.1 15.4 0.70 9.8 13.9 0.54 8.8 13.4 0.44 257.83 -2.63 91.10 4.57 10.40 0.558 kout nomf05 11.1 15.3 0.64 9.8 13.9 0.50 8.8 13.4 0.40 258.40 -2.93 100.90 1.91 11.90 0.233 kout nomf05 12.7 16.7 0.27 11.2 15.0 0.21 10.0 14.4 0.16 258.50 -1.50 67.20 7.70 0.530 kout mab97 7.9 12.7 0.56 7.0 11.6 0.44 6.3 11.6 0.35 258.50 -1.00 81.20 9.40 0.960 kout mab97 9.7 14.1 1.02 8.6 12.8 0.80 7.7 12.6 0.64 258.60 -3.87 105.10 0.87 12.70 0.107 kout nomf05 13.5 17.3 0.12 11.9 15.6 0.09 10.6 14.8 0.07 258.93 -1.03 90.60 0.81 10.40 0.099 kout nomf05 11.1 15.2 0.11 9.8 13.8 0.09 8.8 13.3 0.07 259.00 -1.75 58.50 6.70 1.290 kout mab97 7.0 12.0 1.41 6.1 11.0 1.07 5.5 11.0 0.87 259.25 -2.50 54.50 6.30 1.160 kout mab97 6.6 11.7 1.27 5.8 10.7 0.98 5.2 10.8 0.79 259.37 -1.90 95.80 1.28 11.20 0.156 kout nomf05 11.9 15.9 0.18 10.5 14.4 0.14 9.4 13.8 0.11 259.75 -1.25 62.90 7.30 0.840 kout mab97 7.6 12.3 0.91 6.6 11.3 0.69 6.0 11.2 0.57 259.83 -1.57 94.20 1.00 11.00 0.122 kout nomf05 11.7 15.6 0.14 10.3 14.2 0.11 9.3 13.6 0.09 260.00 0.00 60.70 7.10 0.680 kout mab97 7.3 12.2 0.72 6.4 11.1 0.55 5.8 11.1 0.45 260.07 -1.53 91.70 2.05 10.70 0.251 kout nomf05 11.3 15.3 0.28 10.0 13.9 0.22 9.0 13.4 0.18 260.50 -0.75 57.20 6.70 0.860 kout mab97 7.0 11.9 0.94 6.1 10.9 0.71 5.6 10.9 0.60 260.63 0.38 55.30 6.50 0.950 kout mab97 6.8 11.7 1.04 6.0 10.7 0.81 5.4 10.8 0.66 260.75 -2.50 64.10 7.50 0.390 kout mab97 7.8 12.4 0.42 6.9 11.4 0.33 6.2 11.3 0.27 261.00 -0.75 70.00 8.30 1.510 kout mab97 8.5 12.9 1.58 7.5 11.8 1.23 6.8 11.7 1.01 261.00 -2.50 13.70 2.10 2.951 kout sod91 2.5 9.2 4.18 2.0 8.5 2.68 1.4 8.8 1.31 261.27 -5.03 102.20 2.03 12.40 0.248 kout nomf05 13.2 16.8 0.28 11.7 15.1 0.22 10.4 14.4 0.17 261.40 -2.00 102.90 1.94 12.50 0.237 kout nomf05 13.3 16.8 0.27 11.8 15.2 0.21 10.5 14.5 0.17 261.50 -1.25 55.40 6.60 0.220 kout mab97 6.9 11.7 0.24 6.1 10.7 0.19 5.5 10.8 0.15 261.80 -3.03 103.00 1.20 12.50 0.147 kout nomf05 13.4 16.8 0.17 11.8 15.2 0.13 10.6 14.5 0.11 261.83 -1.47 101.40 1.12 12.30 0.137 kout nomf05 13.1 16.6 0.16 11.6 15.0 0.12 10.3 14.3 0.10 262.17 -2.20 98.60 0.83 11.90 0.102 kout nomf05 12.6 16.2 0.11 11.2 14.6 0.09 10.0 14.0 0.07 262.25 -2.00 59.70 7.20 0.780 kout mab97 7.5 12.0 0.85 6.6 11.0 0.66 6.0 11.0 0.54 262.75 -0.50 59.90 7.30 0.490 kout mab97 7.5 12.1 0.52 6.6 11.0 0.40 6.0 11.0 0.33 263.00 -2.50 62.10 7.50 0.230 kout mab97 7.8 12.2 0.25 6.9 11.2 0.19 6.3 11.2 0.16 263.60 -4.00 111.00 2.51 14.10 0.307 kout nomf05 15.1 18.1 0.35 13.3 16.3 0.27 11.8 15.3 0.22 264.00 -1.50 29.40 4.20 0.800 kout mab97 4.5 10.0 0.92 3.9 9.2 0.69 3.4 9.5 0.52 265.00 -1.50 29.40 4.30 0.480 kout mab97 4.6 10.0 0.55 4.0 9.2 0.42 3.5 9.5 0.32 265.00 0.00 47.10 6.20 0.150 kout mab97 6.4 11.1 0.16 5.6 10.2 0.12 5.1 10.3 0.10 265.25 -1.25 65.90 8.30 0.360 kout mab97 8.5 12.5 0.38 7.5 11.4 0.29 6.9 11.4 0.25 265.50 -1.50 27.00 4.10 0.150 kout mab97 4.4 9.9 0.17 3.8 9.1 0.13 3.3 9.4 0.10 265.53 -2.00 90.80 4.20 11.10 0.513 kout nomf05 11.8 15.1 0.58 10.5 13.6 0.46 9.5 13.2 0.38

L. G. Hou et al.: The spiral structure of our Milky Way Galaxy 33

Table A.2. continued.

l b V_{lsr} L_{CO} D M_{GMCs} Mark Ref. D_{8.5} R_{8.5} M_{8.5} D_{8.0} R_{8.0} M_{8.0} D_{8.4} R_{8.4} M_{8.4} (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) 266.50 -3.00 65.50 8.30 0.340 kout mab97 8.6 12.5 0.37 7.7 11.4 0.29 7.0 11.4 0.24 266.50 -2.00 24.20 4.00 0.110 kout mab97 4.3 9.7 0.13 3.6 9.0 0.09 3.2 9.2 0.07 266.75 -2.00 57.60 7.50 0.280 kout mab97 7.8 11.8 0.30 6.9 10.8 0.24 6.3 10.9 0.20 266.75 -0.75 31.20 4.70 0.180 kout mab97 5.0 10.1 0.20 4.4 9.3 0.16 3.9 9.5 0.12 267.00 -0.75 19.20 3.50 0.320 kout mab97 3.8 9.5 0.38 3.2 8.8 0.27 2.7 9.0 0.19 267.25 -2.00 18.10 3.40 0.160 kout mab97 3.7 9.4 0.19 3.1 8.7 0.13 2.6 9.0 0.09 268.50 -2.50 62.60 8.30 1.120 kout mab97 8.6 12.2 1.20 7.6 11.2 0.94 7.0 11.2 0.80 269.00 -1.25 62.10 8.30 0.720 kout mab97 8.6 12.2 0.77 7.6 11.1 0.60 7.0 11.1 0.51 269.00 -0.50 42.50 6.20 1.070 kout mab97 6.5 10.8 1.18 5.7 9.9 0.90 5.2 10.1 0.75 269.00 -0.50 46.60 6.70 0.480 kout mab97 6.9 11.1 0.51 6.1 10.1 0.40 5.6 10.3 0.34 269.25 -1.75 79.10 10.40 0.910 kout mab97 10.7 13.7 0.96 9.5 12.5 0.76 8.7 12.3 0.64 269.88 -0.13 74.90 10.00 1.870 kout mab97 10.2 13.3 1.95 9.1 12.1 1.55 8.4 11.9 1.32 270.90 -0.50 52.00 6.80 2.200 kout gcbt88 7.8 11.4 2.89 6.9 10.5 2.27 6.4 10.5 1.95 279.90 -1.60 35.00 7.10 1.000 kout gcbt88 7.6 10.4 1.15 6.8 9.5 0.92 6.4 9.7 0.81 281.40 -1.10 -5.00 3.20 22.500 stel gcbt88 22.50 22.50 22.50 282.00 -0.80 17.00 6.10 2.700 kout gcbt88 6.2 9.4 2.79 5.4 8.7 2.12 5.1 8.9 1.89 282.90 1.30 -19.00 2.20 0.700 ktan gcbt88 1.9 8.3 0.52 1.8 7.8 0.47 1.9 8.2 0.52 282.90 -0.70 -5.00 3.20 2.800 kfar gcbt88 3.4 8.4 3.16 2.3 7.8 1.45 1.9 8.3 0.99 283.80 0.00 -5.00 4.00 6.300 stel gcbt88 6.30 6.30 6.30 284.50 -0.20 12.00 6.60 20.300 kout gcbt88 6.2 9.2 17.91 5.4 8.5 13.59 5.1 8.8 12.12 285.30 0.00 0.00 5.30 4.500 kfar gcbt88 4.9 8.6 3.85 4.2 8.0 2.83 3.7 8.3 2.19 286.00 0.00 -20.20 2.34 19.498 kout sod91 2.3 8.2 18.84 286.40 -0.30 14.00 7.50 8.300 kout gcbt88 6.8 9.3 6.82 6.1 8.6 5.49 5.8 8.8 4.96 287.50 -0.50 -19.00 2.70 6.700 stel gcbt88 6.70 6.70 6.70 287.53 0.97 -4.20 3.34 2.60 0.117 stel dkm+08 0.12 0.12 0.12 287.60 8.00 -27.80 3.29 2.60 0.115 stel dkm+08 0.12 0.12 0.12 288.60 1.50 -22.00 3.20 3.500 ktan gcbt88 2.7 8.1 2.49 2.6 7.6 2.31 2.7 8.0 2.49 288.80 1.07 -16.90 56.05 2.60 1.960 stel dkm+08 1.96 1.96 1.96 289.00 -0.50 20.20 7.67 85.114 kout sod91 8.0 9.6 92.60 7.2 8.9 75.00 7.0 9.1 70.89 289.30 -0.60 22.00 7.90 31.200 stel gcbt88 31.20 31.20 31.20 290.20 -0.20 -1.00 6.80 2.700 kfar gcbt88 6.1 8.6 2.17 5.4 8.0 1.70 5.1 8.3 1.52 290.60 -0.20 15.00 8.70 4.300 kout gcbt88 7.9 9.3 3.55 7.1 8.6 2.86 6.9 8.9 2.70 291.50 -1.50 -25.40 3.12 36.308 kout sod91 3.1 7.9 35.84 291.60 -0.40 15.00 7.20 4.100 stel gcbt88 4.10 4.10 4.10 291.60 -0.50 29.00 10.30 12.500 kout gcbt88 9.4 10.1 10.41 8.6 9.3 8.71 8.4 9.5 8.31 292.60 -0.30 4.00 8.10 12.000 kfar gcbt88 7.3 8.8 9.75 6.5 8.2 7.73 6.4 8.4 7.49 293.30 -1.40 -25.00 2.40 7.100 stel gcbt88 7.10 7.10 7.10 294.00 -0.90 32.00 11.30 12.200 kout gcbt88 10.3 10.3 10.14 9.3 9.5 8.26 9.2 9.7 8.09 294.40 -0.70 -3.00 8.00 12.200 kfar gcbt88 7.0 8.5 9.34 6.3 7.9 7.57 6.2 8.2 7.33 295.10 -0.80 26.00 11.00 4.500 kout gcbt88 10.0 10.0 3.72 9.1 9.2 3.08 9.0 9.4 3.01 297.40 -0.50 22.00 11.20 32.100 kout gcbt88 10.1 9.8 26.10 9.2 9.0 21.66 9.2 9.2 21.66 297.50 -0.50 25.40 10.14 218.776 kout sod91 10.5 10.0 234.59 9.5 9.2 192.03 9.5 9.4 192.03 298.60 0.10 -35.00 4.70 26.500 ktan gcbt88 4.1 7.5 20.17 3.8 7.0 17.32 4.0 7.4 19.19 298.80 -0.20 25.00 12.00 30.800 kout gcbt88 10.7 10.0 24.49 9.8 9.2 20.54 9.8 9.4 20.54 299.40 -0.10 -6.00 9.40 4.600 kfar gcbt88 8.0 8.4 3.33 7.3 7.8 2.77 7.3 8.1 2.77 299.50 -0.50 -39.70 4.19 57.544 kout sod91 4.1 7.4 55.10 300.30 -0.20 31.00 12.90 7.000 kout gcbt88 11.6 10.4 5.66 10.6 9.6 4.73 10.6 9.7 4.73 300.60 -0.20 10.00 11.10 4.200 kout gcbt88 9.8 9.1 3.27 9.0 8.4 2.76 9.0 8.7 2.76 301.80 0.00 24.00 12.70 4.200 kout gcbt88 11.3 10.0 3.33 10.4 9.2 2.82 10.4 9.3 2.82 302.30 -0.70 32.00 13.60 29.400 kout gcbt88 12.2 10.5 23.66 11.2 9.7 19.94 11.2 9.8 19.94 303.90 -0.40 29.00 13.70 46.200 kout gcbt88 12.3 10.3 37.24 11.3 9.5 31.43 11.3 9.6 31.43 306.90 -0.50 25.00 14.20 5.600 kout gcbt88 12.6 10.1 4.41 11.6 9.3 3.74 11.7 9.5 3.80 308.00 -0.70 32.00 15.10 21.000 kout gcbt88 13.5 10.7 16.79 12.4 9.8 14.16 12.5 9.9 14.39 311.30 -0.30 27.00 15.50 109.200 kout gcbt88 13.8 10.4 86.56 12.7 9.6 73.31 12.8 9.6 74.47 313.20 -0.30 42.00 17.60 18.200 kout gcbt88 15.9 11.8 14.85 14.6 10.8 12.52 14.6 10.7 12.52 314.00 -0.10 28.00 16.40 4.200 kout gcbt88 14.5 10.6 3.28 13.4 9.7 2.80 13.5 9.8 2.85 315.30 -0.30 14.00 15.40 11.200 kout gcbt88 13.5 9.5 8.61 12.4 8.8 7.26 12.7 8.9 7.62 318.00 -0.30 30.00 17.60 2.800 kout gcbt88 15.7 10.9 2.23 14.4 10.0 1.87 14.6 10.0 1.93 320.50 -0.50 26.00 17.80 12.600 kout gcbt88 15.8 10.7 9.93 14.6 9.8 8.48 14.8 9.8 8.71 325.30 -0.10 28.00 19.30 19.600 kout gcbt88 17.1 11.2 15.39 15.8 10.3 13.14 16.0 10.2 13.47 328.50 -0.10 30.00 20.40 5.600 kout gcbt88 18.2 11.8 4.46 16.8 10.8 3.80 17.0 10.7 3.89 335.50 -0.50 27.00 22.00 0.600 kout gcbt88 19.7 12.4 0.48 18.1 11.4 0.41 18.3 11.1 0.42