arXiv:0910.1724v1 [astro-ph.SR] 9 Oct 2009

Astronomy & Astrophysics manuscript no. s140˙accepted © ESO 2019 June 25, 2019

Water and ammonia abundances in S140 with the Odin^⋆ satellite

C. M. Persson^1, M. Olberg^1, Å. Hjalmarson^1, M. Spaans^2, J.H. Black^1, U. Frisk^3, T. Liljeström^4, A.O.H. Olofsson^{1,5}, D.R. Poelman^6, and Aa. Sandqvist^7

1 Onsala Space Observatory, Chalmers University of Technology, SE-439 92 Onsala, Sweden

e-mail: carina.persson@chalmers.se 2 Kapteyn Astronomical Institute, Rijksuniversiteit Groningen, P.O. Box 800, 9700 AV Groningen, The Netherlands 3 Swedish Space Corporation, PO Box 4207, SE-171 04 Solna, Sweden 4 Metsähovi Radio Observatory, Helsinki University of Technology, Otakaari 5A, 02150 Espoo, Finland 5 GEPI, Observatoire de Paris, CNRS; 5 Place Jules Janssen, 92195 Meudon, France 6 SUPA, School of Physics and Astronomy, University of St Andrews, North Haugh, St Andrews KY16 9SS, U.K. 7 Stockholm Observatory, AlbaNova University Center, SE-10691 Stockholm, Sweden

Received September 7, 2008; accepted November 14, 2008

ABSTRACT

Aims. We investigate the effect of the physical environment on water and ammonia abundances across the S140 photodissociation region (PDR) with an embedded outflow.

Methods. We have used the Odin satellite to obtain strip maps of the ground-state rotational transitions of ortho-water and orthoammonia, as well as CO(5 – 4) and^{13}CO(5 – 4) across the PDR, and H^{18}_2 O in the central position. A physi-chemical inhomogeneous PDR model was used to compute the temperature and abundance distributions for water, ammonia and CO. A multi-zone escape probability method then calculated the level populations and intensity distributions. These results are compared to a homogeneous model computed with an enhanced version of the RADEX code.

Results. H_2O, NH_3 and^{13}CO show emission from an extended PDR with a narrow line width of ∼3 km s^{−1}. Like CO, the water line profile is dominated by outflow emission, however, mainly in the red wing. Even though CO shows strong self-absorption, no signs of self-absorption are seen in the water line. H^{18}_2 O is not detected. The PDR model suggests that the water emission mainly arises from the surfaces of optically thick, high density clumps with n(H_2)>∼10^6 cm^{−3} and a clump water abundance, with respect to H_2, of 5×10^{−8}. The mean water abundance in the PDR is 5×10^{−9}, and between ∼2×10^{−8} – 2×10^{−7} in the outflow derived from a simple twolevel approximation. The RADEX model points to a somewhat higher average PDR water abundance of 1×10^{−8}. At low temperatures deep in the cloud the water emission is weaker, likely due to adsorption onto dust grains, while ammonia is still abundant. Ammonia is also observed in the extended clumpy PDR, likely from the same high density and warm clumps as water. The average ammonia abundance is about the same as for water: 4×10^{−9} and 8×10^{−9} given by the PDR model and RADEX, respectively. The differences between the models most likely arise due to uncertainties in density, beam-filling and volume filling of clumps. The similarity of water and ammonia PDR emission is also seen in the almost identical line profiles observed close to the bright rim. Around the central position, ammonia also shows some outflow emission although weaker than water in the red wing. Predictions of the H_2O 1_{1,0} – 1_{0,1} and 1_{1, 1} – 0_{0, 0} antenna temperatures across the PDR are estimated with our PDR model for the forthcoming observations with the Herschel Space Observatory.

Key words. ISM: abundances – ISM: individual (Sh 2-140) – ISM: molecules – Submillimeter – Line: profiles – Line: formation

1. Introduction

The chemistry and the evolution of the interstellar medium depend to a high degree on the available amount of carbon and oxygen. The carbon-based chemistry is fairly well understood, but the oxygen chemistry is not. Two molecules vital to the understanding of the oxygen chemistry are water and molecular oxygen, since some chemical models predict that a large fraction of oxygen could be in the form of these molecules.

Observations of the ground-state rotational water transition with NASA’s Submillimeter Wave Astronomy Satellite (SWAS; Melnick et al., 2000b) and the Odin satellite (Nordh et al.,

Send offprint requests to: carina.persson@chalmers.se ⋆ Odin is a Swedish-led satellite project funded jointly by the Swedish National Space Board (SNSB), the Canadian Space Agency (CSA), the National Technology Agency of Finland (Tekes) and Centre National d’Etudes Spatiales (CNES). The Swedish Space Corporation was the prime contractor and also is responsible for the satellite operation.

2003) have both shown very low abundances of molecular oxygen, 5×10^{−8} (Larsson et al., 2007), and water, 10^{−8} – 10^{−9} (Olofsson et al., 2003), in the extended cold clouds in contrast to the predictions from chemical models. However, at smaller scales in warm or shocked regions and outflows, where the density is higher than 10^5 – 10^6 cm^{−3}, SWAS (e.g. Melnick et al., 2000a) and Odin (e.g. Persson et al., 2007) have also shown locally increased water abundance by several orders of magnitude, 10^{−6} – 10^{−4} with respect to molecular hydrogen. The analysis of the data is, however, somewhat difficult and uncertain due to observations of a single line and large beam-widths, but is in agreement with observations of a wealth of highly excited water vapor transitions with ISO (the Infrared Space Observatory, Cernicharo & Crovisier, 2005). These locally high abundances support the predictions that water should be an important cooling agent in the star-forming process, especially at high temperatures and densities (e.g. Neufeld et al., 1995; Bergin et al., 2003). The strong dependence of the water chemistry on the tem-

2 C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite

perature changes seen in star-forming regions also make water an excellent tracer of shocks and outflows from protostars still hidden within their dusty envelopes (e.g. Bergin et al., 1998).

The intention of this paper is to continue the previous work with ISO, SWAS, and Odin, and also to be a valuable input to future observations with the Heterodyne Instrument for the Far Infrared (HIFI) on board the Herschel^1 satellite to be launched in 2009. Our aim is to investigate how the water abundance depends on the environment in a star-forming region. The high spectral resolution (0.5 km s^{−1}) and the smaller beam-size of Odin compared to SWAS (2.^′1 vs. 3.^′3×4.^′5), which enable higher spatial resolution maps, allows a more detailed analysis of the line profile observed at each map position. We can also obtain an estimate of the beam-filling by comparing SWAS and Odin line profiles if the same object has been observed. If not properly taken into account the beam-filling may otherwise influence the results by orders of magnitude.

In addition to the water observations a second goal of our work is to perform and analyse observations of the important ground-state rotational transition of ammonia. While ammonia has been extensively observed in the inversion transitions at cmwavelengths (e.g. Ungerechts et al., 1986; Zhou et al., 1993), the 1_0 – 0_0 transition, however, cannot be observed from ground due to the opaque terrestrial atmosphere. The first observation of this transition was performed by the Kuiper Airborne Observatory (Keene et al., 1983), and was later followed up with Odin (Larsson et al., 2003; Liseau et al., 2003; Olofsson et al., 2007).

Our chosen target is the well known molecular cloud and bright nebula Sh 2-140, more commonly known as S140 (Sharpless, 1959; Blair et al., 1978). It is located at a distance of 910 pc (Crampton & Fisher, 1974) in the large L1202/L1204 dark cloud. This region is illuminated from the south-western side by the nearby B0.5V star HD 211880, creating a bright HII region and an almost edge-on PDR adjacent to the molecular cloud and extending deeply into the cloud. The core in S140 also contains a small cluster of deeply embedded young stellar objects which illuminate the cloud from within. One or more of these early B-stars are undergoing some mass-loss process and molecular outflows are observed from this dense and warm region (e.g. Rouan et al., 1977; Hayashi et al., 1987; Minchin et al., 1993; Preibisch & Smith, 2002). The brightest infrared source in S140, called IRS1, is on small scales composed of several sources, two of which might be powering bipolar molecular outflows in almost perpendicular directions (Trinidad et al., 2007). The increased temperature and density in both the PDR and the outflows are likely expected to produce a higher than average water abundance. For these reasons, S140 is a promising target for our purposes.

Both ISO (Boonman & van Dishoeck, 2003) and SWAS (Snell et al., 2000a; Ashby et al., 2000a,b; Franklin et al., 2008) have observed water in S140 and several attempts have been made to model these observations (e.g. Ashby et al., 2000a,b; Boonman et al., 2003; Poelman & Spaans, 2005, 2006). However, they all have had difficulties to explain the unusual, narrow 1_{1,0} – 1_{0,1} emission line with no or little evidence of self-absorption. In order to obtain more information about the water emission we have conducted strip map observations of S140, starting deep within the molecular cloud and reaching outside the bright rim (see Fig. 1). Strip maps are also simultaneously performed of the previously unobserved NH_3(1_0 – 0_0) transition.

1 http://herschel.esac.esa.int/

Fig. 1. A CI map (492 GHz) of S140 observed with JCMT (Minchin et al., 1993). The Odin 2.^′1 beam at the five strip positions is also shown. Position 1 in NE to position 5 in SW.

To aid the analysis of water and ammonia, we have in addition performed H^{18}_2 O observations in the central position, strip maps of CO (5 – 4) and^{13}CO (5 – 4) with the Odin satellite, and a^{13}CO (1 – 0) map with the Onsala 20-m telescope.

2. Observations

All transitions, except^{13}CO(1 – 0), were acquired with the Odin satellite from 2003 to 2006 with a total of 561 orbits (see Table 1). The calibration procedure (the chopper wheel method) is described in Olberg et al. (2003). The Odin 1.1 m offset Gregorian telescope has a circular beam at 557 GHz with a Full Width of Half Maximum (FWHM) of 2.^′1 (Frisk et al., 2003). Being outside the atmosphere, and with an exceptionally high main beam efficiency, η_{mb} = 0.9, our intensity calibration is very accurate. The intensity scale in the figures is expressed in terms of antenna temperature T^∗_A. In all calculations, however, the main beam efficiency is properly taken into account. The reconstructed pointing offset was <15^{′′} during most of the time. The simultaneous observations of H_2O and NH_3, and of^{13}CO, CO and H_2O guarantee their pointing to be identical.

Three different tunable submm receivers were used, having average single-sideband (SSB) system temperatures of about 3 300 K. They were used in combination with a hybrid autocorrelator spectrometer (300 – 400 MHz working bandwidth) and an acousto-optical spectrometer (1 GHz working bandwidth), both with a channel spacing of ∼0.3 km s^{−1}. All observations were performed in the sky-switching mode with reference sky beams at 42^∘ distance and 4.4^∘ FWHM. To correct for ripple, observations of a reference off position 30^′ east of S140 were conducted as well.

The five point strip maps have 60^{′′} step size with strip centre coordinates R.A. 22.^h17.^m42 .^s0, Dec. +63.^∘03.^′45.^{′′}0 (B1950) at the cloud core (our position 3, Fig. 1). Position 1 is in NE and posi-

C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite 3

Table 1. Observed molecular transitions. All lines are observed with the Odin satellite except the^{13}CO(1 – 0) map which is observed with the Onsala 20-m telescope.

Species Transition Freq. E^a_u n^b_{crit} Int. time [MHz] [K] [cm^{−3}] [h]

H_2O 1_{1,0} – 1_{0,1} 556 936.0 61 3×10^{8 c} 41 H^{18}_2 O 1_{1,0} – 1_{0,1} 547 676.4 60 3×10^{8 c} 91 CO 5 – 4 576 267.9 83 2×10^{5 c} 9 13CO 5 – 4 550 926.3 79 2×10^5 9 13CO 1 – 0 110 210.4 5 7×10^2 2 min/pos NH_3 1_0 – 0_0 572 498.1 29 5×10^{7 c} 16

aUpper state energy.

bCritical density calculated for a temperature of 40 K. cCan be considerably reduced because of radiative trapping.

tion 5 in SW. The frequency scale is set relative to a source LSR velocity of −7.5 km s^{−1}.

In addition, the Onsala 20-m telescope was used in 2006 for a^{13}CO(1 – 0) 10×11 point map of the S140 molecular cloud with a spacing of 30^{′′}. The SSB system temperature was ∼500 K, the main-beam efficiency = 0.5, and the FWHM beam at 110.201 GHz is 34^{′′}.

3. Results

The observed Odin spectra of CO, H_2O, and NH_3 are shown together with^{13}CO(5 – 4) in Figs. 2 – 4 to allow a comparison of the line profiles of the different molecules at each position. The water and ammonia spectra are also shown together in Fig. 5. No H^{18}_2 O emission was detected in the central position (Fig. B.1, on-line material) at an rms noise level of 8 mK. Tables with 1σ rms, integrated intensities, peak antenna temperatures, line widths and amplitudes of Gaussian fits, and centre velocities for species observed with Odin are found in the on-line Tables B.1 – B.4. The on-line material also includes figures of Gaussian fits to^{13}CO(1 – 0) and J = 5 – 4, H_2O and NH_3(1_1 – 0_0) (Figs. B.4 – B.7).

Below we will discuss the observations and some straight forward results, while the model results for the narrow PDR component are presented in Sect. 4 and 5.

3.1. Carbon monoxide

The CO(5 – 4) and^{13}CO(5 – 4) observations show a narrow line from the PDR in all positions superimposed on a broader outflow feature seen in CO at positions 1 – 4 and in^{13}CO at the centre position (Fig. 2). The emission peaks about 20^{′′} from the central position towards position 2 deeper in the cloud. A comparison of the^{12}CO and^{13}CO line shapes suggests strong CO(5 – 4) selfabsorption by lower excitation foreground gas. This is also discussed by e.g. Minchin et al. (1993) and Boonman et al. (2003) where the higher J-level CO lines are strongly self-absorbed. No strong self-absorption is visible in^{13}CO.

The mean opacity of^{12}CO and^{13}CO can be determined by comparison of their antenna peak temperatures if the isotopologue abundance ratio R is known. Assuming that the opacity of

12CO is larger than the opacity of^{13}CO by a factor R, we will have

T^∗_{A,13}

T^∗_{A,12} = J(T^{13}_{ex} ) (1 − e^{−τ13} ) η_{bf,13} J(T^{12}_{ex} ) (1 − e^{−τ12} ) η_{bf,12} = J(T^{13}_{ex} ) (1 − e^{−τ13} ) η_{bf,13} J(T^{12}_{ex} ) (1 − e^{−R τ13} ) η_{bf,12}

, (1)

where the radiation temperature, J(T_{ex}), is a function of the excitation temperature, T_{ex},

J(T_{ex}) = hν k 1 e^{hν/kTex} − 1

. (2)

The beam-filling factor η_{bf} = θ^2_s /(θ^2_s + θ^2_{mb}), assuming that both the source brightness distribution and the antenna response are circularly symmetric and Gaussian.

Assuming that the excitation temperatures are the same for both species, co-spatial emissions and using R = 70, the opacities of the narrow component of^{12}CO and^{13}CO are estimated to be ≲ 70 and ≲1, while the opacities in the broad outflow component are ≲ 7 and ≲ 0.1, respectively. Due to the self-absorption of^{12}CO the opacities are upper limits.

The size of the emission region can be estimated by comparing Odin and SWAS antenna temperatures

T^∗_{A,Odin}

T^∗_{A,SWAS} = (3.^′3 × 60 × 4.^′5 × 60) + θ^2 (2.^′1 × 60)^2 + θ^2

, (3)

where θ is the effective circular Gaussian source size in arcseconds. For the central position the ratio of the Odin and SWAS 13CO peak antenna temperatures is ∼2.5 which is equivalent to a mean source size of ∼100^{′′}.

A second approach to estimate the source size is performed by plotting the antenna temperatures in our Odin strip map vs. position, and fitting a Gaussian. After deconvolution with the 126^{′′} Odin beam, the resulting one dimensional source size is about 106^{′′}. Together with the mean source size of ∼100^{′′}, this implies a relatively circular source.

The excitation temperature can be estimated by plotting a rotation diagram of several transitions. The level populations are given by the Boltzmann equation and the excitation temperatures for all the energy levels are assumed to be the same. The beamfilling corrected integrated intensities of all lines are plotted as a function of the upper state energy in a semi-log plot based upon the relation (Persson et al., 2007) ln 8π k ν^2_{ul} h c^3g_u A_{ul} � T_b dυ = ln

N_{ROT} Q(T ) − E_u kT_{ex}

. (4)

where k is the Boltzmann constant, ν_{ul} is the frequency of the transition, h is the Planck constant, c is the speed of light, A_{ul} is the Einstein A-coefficient for the transition, T_b is the brightness temperature (observed antenna temperature corrected for beamefficiency and beam-filling), g_u and E_u are the statistical weight and energy of the upper state, respectively, Q(T ) is the partition function, T_{ex} is the excitation temperature for the transition, and N_{ROT} is the total column density of the species obtained from the rotational diagram. As customary the frequency axis ν has been converted to a velocity axis υ using the speed of light. A least-squares fit to the data will produce a straight line with slope −1/T_{ROT}. If we extrapolate the line to E_u = 0 K, the total column density is found from the intersection of the y-axis.

Our rotation diagram of the broad outflow^{13}CO component in the central position (on-line Fig. B.2), including the Onsala 20-m J = 1 – 0 transition, the J = 2 – 1 and 3 – 2 transitions from Minchin et al. (1993), and the Odin J = 5 – 4 transition, produces T_{ROT} = 24±2 K and N_{ROT} = (2.5±0.4)×10^{16} cm^{−2}.

4 C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite

Fig. 2. Comparison of the CO(5 – 4) (thick magenta line) and 13CO(5 – 4) (thin black line) line profiles in a strip map from NE to SW across the PDR.

All antenna temperatures are corrected with respective beamfilling and beam-efficiencies. This temperature is in agreement with the previously estimated lower limit of the outflow excitation temperature of about 15 – 20 K (Minchin et al., 1993). The low temperature of the outflow indicates that the emission arises from gas far behind the shock front where the gas has already cooled (Snell et al., 1984b).

The excitation temperature of the narrow^{13}CO PDR emission in the central position is also estimated by means of a rotation diagram (on-line Fig. B.3), including the above mentioned transitions with addition of the J = 6 – 5 line from Graf et al. (1993), but excluding J = 1 – 0 which seems to originate only in the colder gas component. This produces T_{ROT} = 69±27 K, in agreement with Minchin et al. (1993) who find a PDR excitation temperature of about 70 K at IRS and a steep rise in temperature to about 250 K at the dissociation front 60^{′′} – 80^{′′} SW of IRS1. Our PDR column density, N_{ROT}(^{13}CO) = (3.2±1.8)×10^{16} cm^{−2}, is relatively uncertain but in agreement with the RADEX result in Sect. 4, N(^{13}CO) = 2.8×10^{16} cm^{−2}, and with Plume et al. (1994), 3.4×10^{16} cm^{−2}.

3.2. Water

The ortho-water 1_{1,0} – 1_{0,1} ground-state rotational transition is detected in all positions except outside the bright rim (po-

Fig. 3. Comparison of the H_2O 1_{1,0} – 1_{0,1} (thick magenta line) and^{13}CO(5 – 4) (thin black line) line profiles in a strip map from NE to SW across the PDR.

sition 5). Similar to CO and^{13}CO, a narrow component (Δυ ∼3 km s^{−1}) superimposed on a broader outflow component (Δυ ∼8.5 km s^{−1}) is observed with emission originating around the central position. Like CO, the water line profile is dominated by outflow emission, clearly seen in a fit of two Gaussian components in the on-line Fig. B.6. The integrated intensity of outflow emission is only about 20% for^{13}CO compared to 60% for water which in addition mainly shows a red wing (Fig. 3). This apparent strong outflow emission may not, however, reflect the true relative abundances of the PDR and outflow components if the line is optically thick. The opacity is several times higher in the PDR than in the outflow and, depending on the opacity, this may lower the fraction of outflow emission. The^{13}CO emission is on the other hand almost optically thin which gives more accurate relative amounts of the respective emissions.

The non-detection of H^{18}_2 O can be used to set upper limits on the opacity of the main water line using Eq. 1. However, the calculation is not as straightforward as for CO. Because of the high critical density (the ratio of the spontaneous de-excitation and collision coefficients) of the H_2O 557 GHz line, the emission of this transition is highly sub-thermal and has a high opacity even for rather low abundances. This high optical depth allows the excitation temperature to be enhanced by radiative trapping. As a result, the corresponding lines of H_2O and H^{18}_2 O have quite different values of excitation temperature. Their excitation tem-

C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite 5

Fig. 4. Comparison of the NH_3 1_0 – 0_0 (thick magenta line) and 13CO(5 – 4) (thin black line) line profiles in a strip map from NE to SW across the PDR.

peratures will also be much lower than the kinetic temperature. Using the RADEX code in Sect. 4 for a kinetic temperature of 55 K and a molecular hydrogen density n(H_2) = 4×10^5 cm^{−3}, we find excitation temperatures of 8.2 and 6.3 K for the 1_{1,0} − 1_{0,1} transitions of H_2O and H^{18}_2 O, respectively. If the abundance ratio [^{16}O/^{18}O] = 330 in water (Persson et al., 2007) and if the two isotopologues are distributed similarly, then the 5σ upper limit on the intensity of the H^{18}_2 O line implies that the optical depth of the H_2O line is ≲ 60. If the assumed density is lower by a factor of 10, the difference in excitation temperatures will increase and change the upper limit to ≲120.

In addition, the high H_2O opacity often produces selfabsorbed spectra. Our observations, however, do not show any obvious signs of self-absorption, in contrast to our CO lines. When comparing the centre velocities of the narrow components of water and CO to^{13}CO, we find that the velocities of water and^{13}CO are well matched (Fig. 3 and Table B.2 – B.3), while CO and^{13}CO in positions 1 – 4 are not (Fig. 2). This supports our conclusion that there is no severe self-absorption in H_2O in contrast to observations of other sources in which corresponding self-absorptions were seen in CO(7-6) and in ISO measurements of H_2O (Boonman et al., 2003).

The lack of self-absorption points to a rather constant excitation across the region (cf. Snell et al., 1984a). It also implies a lower water abundance in the blue than in the red outflow. A

Fig. 5. Comparison of the H_2O (thick magenta line) 1_{1,0} – 1_{0,1} and the NH_3 (thin black line) 1_0 – 0_0 line profiles in a strip map from NE to SW across the PDR.

higher water abundance in the red wing may be caused by outflowing gas pushing into the ambient high density cloud thereby producing water. The blue outflow, on the other hand, is leaving the molecular cloud, and expands into an ionized region with low density gas with no or very low water production as a result. This is in agreement with the results in Franklin et al. (2008) who investigated water abundance in molecular outflows with SWAS and find about five times higher abundance in the red outflow compared to the blue.

The sizes of the emitting regions are estimated in the same way as for^{13}CO (Eq. 3). For the central position the ratio of the Odin and SWAS peak antenna temperatures is ∼2.4, equivalent to a mean source size of ∼100^{′′}. This confirms previous suggestions that the water emission does not fill the SWAS beam (Boonman et al., 2003). To obtain estimates of the size of each component, we use the amplitudes of the fitted Gaussians from the Odin and SWAS spectra. The ratios of the PDR and outflow components are ∼2.2 and ∼2.6, which corresponds to mean source sizes of 120^{′′} and 85^{′′}, respectively.

Gaussian fits to the amplitudes in each position in the Odin strip map results in one-dimensional source sizes of ≳150^{′′} and ≲50^{′′} for the PDR and outflow, respectively. Taken together, these two calculations of source sizes suggest that the water emission from the PDR is more extended in the NE – SW direc-

6 C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite

tion (same direction as our strip map), while the contrary applies to the outflow, indicating a NW – SE elongation.

A third approach to estimate the beam-filling can be achieved by using the radiative transfer equation. With a constant source function, the solution of the radiative transport equation is (cf. Persson et al., 2007)

T^∗_A = T_b η_{mb} η_{bf} = (J(T_{ex}) − J(T_{cont})) (1 − e^{−τ}) η_{mb} η_{bf} , (5)

where J(T_{cont}) is the background continuum radiation.

For an optically thick line and neglecting the background radiation

T^∗_A ≈ J(T_{ex})η_{mb} η_{bf} . (6)

If T_{ex} is known, then the beam-filling can be estimated. Using T_{ex} = 8.2 K obtained from RADEX and Equation 6 give a beamfilling factor that corresponds to a PDR source size of about 110^{′′}, which is close to the source size of 120^{′′} obtained from the relative temperatures from Odin and SWAS. This implies that the gas is somewhat clumped, and that the surface filling fraction of the high density PDR gas is ∼84%. The clumpy structure of the cloud is confirmed by previous observations (Snell et al., 1984a,b; Zhou et al., 1993; Minchin et al., 1993; Hayashi & Murata, 1992; Ashby et al., 2000a) and our model results in Sect. 5. The amount of surface clumping is, however, not possible to determine very accurately due to the uncertainty of the excitation temperature which is affected by the assumed density. With T_{ex} = 9 K and 10 K the same calculations give source sizes of 86^{′′} and 69^{′′}, with corresponding surface filling fractions of 50% and 33%, respectively. Including the background radiation in Eq. 5 also introduces additional uncertainties.

3.3. Ammonia

A complex energy level diagram with a wealth of transitions covering different temperatures and densities has made ammonia a very valuable diagnostic of physical conditions in the interstellar medium. The 1_0 – 0_0 ground-state rotational transition, observed by Odin, has an upper state energy comparable to the extensively observed inversion transitions (e.g. Ungerechts et al., 1986; Zhou et al., 1993), but the critical density is about four orders of magnitude larger. It is therefore likely that these transitions partly probe different gas components. As for water, the 1_0 – 0_0 transition has a high opacity and is highly sub-thermally excited in most cases.

The 1_0 – 0_0 transition of ortho-NH_3 is detected in all positions except outside the bright rim (position 5). The line profiles and centre velocities are very similar to those of^{13}CO(5 – 4) with an exception in position 1 (Fig. 4). Our comparison of ammonia and water in Fig. 5 shows an almost identical line profile at the bright rim (position 4), which suggests emission from the same gas and velocity fields at this position originating in the PDR. In the central position the water emission shows a more pronounced outflow in the red wing than ammonia, although very similar in the blue outflow. The emission fraction of the outflow is 35% for ammonia, while it is almost twice as high for water. This suggests that the outflow production mechanism is more efficient for water than ammonia. The water emission from the outflow seems to be almost the same in position 2 and 3, while the ammonia emission from the outflow decreases in position 2. Deepest in the molecular cloud a very weak water line is seen. The ammonia emission is, however, considerably stronger than the water emission at this position. This confirms previous observations of NH_3 inversion transitions (Zhou et al., 1993; Ungerechts et al., 1986) who find a NH_3 peak further into the cloud at about 1^′ northeast of IRS1. When we plot the peak antenna temperatures vs. position it is obvious that we see additional emission in position 1. A Gaussian fit to positions 2 – 4 gives a source size of ∼130^{′′}, with a peak about 10^{′′} into the cloud from the centre. This size is relatively uncertain due to a fit to only three positions, but agrees well with the source sizes estimated from^{13}CO and H_2O.

The Odin observations indicate that in addition to the warm, dense PDR and a weak outflow around IRS, we also observe NH_3 from the same cold and extended gas deep in the cloud (position 1) as^{13}CO(1 – 0) at a temperature about 20 – 30 K. This is also in agreement with Ungerechts et al. (1986) and Zhou et al. (1993) who find a NH_3 rotation temperature of 40 K in between our first and second position. Chemical models predict that NH_3 is not depleted in high density regions (≲1×10^6 cm^{−3}) and is therefore relatively more abundant than other molecules such as water and CO (Bergin & Langer, 1997; Bergin, 2003).

The surface filling fraction of the narrow PDR component of ammonia is also estimated using the radiative transfer equation (Eq. 6). The excitation temperature is approximately the same as for water thereby producing similar surface filling factors. Together with the similarity of the line profiles, source sizes and centre velocities of the H_2O, NH_3 and^{13}CO(5 – 4) narrow components, this points to emission from the same high density PDR clumps with the same temperature of about 70 K for all species (cf. Boonman et al., 2003).

3.4. Outflow abundances

The collisional de-excitation of the ground-state rotational transition of ortho-water is very low in the density ranges considered here due to the high critical density of ∼3×10^8 cm^{−3} at a temperature of 40 K. A simple analytic expression for the antenna temperature of a two-level system in the low collision rate limit can therefore be used since collisional excitation always results in a photon that escapes the cloud. Thus, even though our transition may be optically thick, it is effectively thin (Linke et al., 1977; Snell et al., 2000b). We use this approach to estimate the water abundance in the outflow (Snell et al., 2000b) � T_b dυ = C n_{H2} c^3 2ν^3k

N(o − H_2O) hν 4π exp(−hν/kT_K), (7)

where C is the collision rate which equals the product of the cross-section and velocity. Dividing Eq. (7) with N(H_2) and scaling the calculated factor in Snell et al. (2000b) to our derived rotational outflow temperature of 24 K (with √ T ) produces the fractional abundance of ortho-water with respect to H_2 in the outflow

X(o − H_2O) = 3.2 × 10^{19} � T_b dυ

N(H_2) n_{H2}

. (8)

The H_2 column density in the outflow is calculated from N_{ROT}(^{13}CO) of the broad component. Using typical values of [CO/H_2] = 1×10^{−4} and [^{12}C/^{13}C] = 70 we obtain N(H_2) = 1.8×10^{22} cm^{−2}. Together with a range of mean molecular hydrogen densities of 5×10^4 – 5×10^5 cm^{−3} we obtain a total water outflow abundance of ∼ 2×10^{−8} – 2×10^{−7}. This is in agreement with Franklin et al. (2008) who found an outflow abundance in the blue wing of 2.4×10^{−8} and 1.0×10^{−7} in the red wing using a kinetic temperature of 30 K and a molecular density of 10^5 cm^{−3}.

The ammonia abundance in the outflow is estimated using the Local Thermal Equilibrium (LTE) approximation. Assuming

C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite 7

Table 2. Observations and model calculations for the narrow PDR component in the RADEX homogeneous model.^a

Species Transition Frequency Observations Ref Model calculations ν T_b 4πI Δυ T_{ex} τ T_b 4πI [GHz] [K] [ergs s^{−1} cm^{−2}] [km s^{−1}] [K] [K] [ergs s^{−1} cm^{−2}] H_2O 1_{1,0} – 1_{0,1} 556.936 0.92 . . . 3.1 c 8.2 6.6 0.92 6.8 × 10^{−6} H^{18}_2 O 1_{1,0} – 1_{0,1} 547.676 < 0.051 . . . (3.1)^b c 6.3 0.2 < 0.05 < 3.5 × 10^{−7} NH_3 1_0 – 0_0 572.498 1.1 . . . 3.3 c 9.0 6.1 1.1 9.2 × 10^{−6} (1, 1) 23.695 2.9 . . . . . . d 54 0.02 0.87 2.5 × 10^{−10} (2, 2) 23.723 2.0 . . . . . . d 47 0.01 0.50 1.7 × 10^{−10} (3, 3) 23.870 1.4 . . . . . . d −5.1 −0.25 2.2 9.0 × 10^{−10} (4,4) 24.139 0.15 . . . . . . d 46 0.001 0.06 3.8 × 10^{−11} 13CO 2 – 1 220.399 12 . . . 3.3 e 55 0.2 9.1 4.3 × 10^{−6} 5 – 4 550.926 14.7 . . . 3.2 c 51 0.5 14.7 1.1 × 10^{−4} CS 2 – 1 97.981 8.6 . . . 3.0 f 47 0.2 9.1 3.5 × 10^{−7} 3 – 2 146.969 10.2 . . . 3.0 f 20 1.0 10.0 1.3 × 10^{−6} 5 – 4 244.936 5.4 . . . 3.0 f 13 1.3 5.5 3.3 × 10^{−6} 6 – 5 293.912 3.3 . . . 2.2 f 12 0.7 3.1 3.3 × 10^{−6} [C I] 1 – 0 492.161 3.7 . . . 3.5 g 54 0.1 3.7 2.1 × 10^{−5} [C II] 3/2 – 1/2 1900.537 . . . 4.4 × 10^{−3} . . . h 55 1.0 13.4 4.4 × 10^{−3} [O I] 1 – 2 4744.778 . . . 4.1 × 10^{−3} . . . h 46 0.9 0.88 4.5 × 10^{−3}

a All results for T_K = 55 K, n(H_2) = 4×10^5 cm^{−3}. T_b = Rayleigh-Jeans brightness temperature, 4πI = flux, Δυ = line width, T_{ex} = excitation temperature, τ = line-center peak opacity.^b From H_2O.^c This work.^d Ungerechts et al. (1986).^e Minchin et al. (1993).^f Snell et al. (1984a). gPlume et al. (1994).^h Emery et al. (1996).

LTE and adding corrections for opacity and beam-filling, the total source averaged column density can be calculated as

N_{LTE} =

C_τ η_{bf}

8πkν^2_{ul} hc^3 1 A_{ul}

Q(T ) g_u exp (E_u/kT_{ex}) � T_b dυ, (9)

where C_τ = τ/(1 − exp (−τ)) is the opacity correction factor. Using C_τ = 1, a source size of 85^{′′} to calculate η_{bf} and an excitation temperature of 10 K, the ammonia outflow column density is estimated to be ∼1.2×10^{13} cm^{−2}. This column density is thus not opacity-corrected and may therefore be underestimated. The ammonia outflow abundance is calculated as X(NH_3) = N_{NH3} /N_{H2} and is found to be ∼7×10^{−10}.

4. Model results: RADEX – a homogeneous model

In this section we use an enhanced version of the RADEX^2 (van der Tak et al., 2007) code to compute the intensities of the narrow components of the transitions observed by Odin, and the intensities of several atomic and molecular transitions that previously have been observed in S140. The RADEX codex applies a very simple method of mean escape probabilities to the radiative transfer and yields results that are similar to those in the large-velocity-gradient approximation, assuming an isothermal and homogeneous medium, but without an implicit assumption of a gradient in velocity. Although much more sophisticated methods of radiative transfer have been used to construct models of the atomic and molecular line emission from this region, it is useful to examine a simple, internally consistent model of a homogeneous cloud that reproduces the principal observed facts. Such a model can be used in particular to assess the role of radiative coupling of molecular excitation to the intense continuous radiation within the PDR. In Sect. 5, these results are

2 The published version will soon include these enhancements, see http://www.sron.rug.nl/∼vdtak/radex/index.shtml compared to the results from a 3D inhomogeneous PDR model that calculates the temperature and abundance distributions, and a multi-zone escape probability method that calculates the level populations and intensity distributions of water and ammonia (Poelman & Spaans, 2005, 2006).

The molecular data files for H_2O and NH_3 have been enlarged, compared with those previously available through the Leiden Atomic and Molecular Database (LAMDA)^3. Data for the ortho and para forms of these molecules have been combined into a single file and infrared transitions have been added. Collision rates published by Faure et al. (2007) for H_2 + H_2O and by Faure et al. (2004) for e^− + H_2O are now used. Two different data files have been used to analyse the excitation of NH_3. The smaller includes only the lowest 112 levels of the vibrational ground state and 140 radiative transitions between them. A larger file, derived mainly from the HITRAN^4 database, has also been tested: it contains 2 392 levels and 15 067 radiative transitions, including lines of several ν_2 and ν_4 vibrational bands in the mid-infrared.

We include a simple dust model of the broad-band spectrum (Thronson et al., 1983; Minchin et al., 1995; Ney & Merrill, 1980) at submm and far-infrared wavelengths in order to characterize the internal radiation sensed by the molecules (a detailed description is found in Appendix A of the on-line material).

The principal parameters needed to specify a model are the kinetic temperature T_K and the average number density of molecular hydrogen n(H_2). Our adopted dust model implies N(H_2) = 4.7×10^{22} cm^{−2} and an average density n(H_2) = 3×10^4 cm^{−3} in a homogeneous, spherical cloud with a source size L = 0.5 pc (derivation in Appendix A, on-line material). Unfortunately, this average density is inconsistent with our observations. Although a uniform RADEX model can be constructed based upon this density, this low-density model cannot

3 http://www.strw.leidenuniv.nl/∼moldata 4 http://cfa-www.harvard.edu/hitran

8 C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite

explain the observed intensities of the pure rotational lines of H_2O and NH_3 unless the line-center optical depths are of the order of 200 and 100, respectively. Such large opacities would imply significant line broadening through saturation of the emission, which conflicts with the observed narrow profiles.

High densities of 7×10^5 cm^{−3} are found by multitransition CS observations (Snell et al., 1984a), and 5×10^5 cm^{−3} from NH_3 inversion transitions (Ungerechts et al., 1986). We include the CS transitions in our RADEX model in addition to our own observations, and our best fit suggests a mean molecular density of 4×10^5 cm^{−3} and a temperature of 55 K. This suggests that the strongly emitting molecules occupy only a 7% fraction of the volume. The H_2 column density, which is needed to obtain the abundances, X(x) = N(x)/N(H_2), is calculated from the N(^{13}CO) obtained with RADEX. This column density is also in agreement with N_{ROT}(^{13}CO) found in Sect. 3.1. Using [^{12}C/^{13}C] = 70 and [CO/H_2] = 10^{−4} we obtain N(H_2) = 2.0×10^{22} cm^{−2} for the narrow PDR component.

Table 2 collects the observed intensities and the corresponding values calculated from the model. A source size of 120^{′′}, derived in Sect. 2, is used to correct the antenna temperatures T^∗_A to Rayleigh-Jeans brightness temperatures T_b according to the scaling in Eq. 5. The estimated abundances and column densities are summarized in Table 3. Note that the best-fitting model of the [C II] λ157 μm line emission implies a density of carbon ions, n(C^+) = 7.7 cm^{−3}. This is taken to be equal to the electron density, which implies an average electron fraction of X(e^−) = 1.9×10^{−5}. This electron fraction is large enough that electron-impact on polar molecules like H_2O must be competitive with H_2 collisions in exciting rotational states. However, the results presented for NH_3 so far neglect electron collisions.

The model reproduces nicely all main beam temperatures except the ammonia inversion transitions which are predicted to be lower than the observed intensities. The^{13}CO(2 – 1) transition is also predicted to be slightly lower than what is observed. These discrepancies may be caused by a co-existing, extended lower excitation gas component, which is not contributing much to the emission of the^{13}CO(5 – 4) or NH_3(1_0 – 0_0) lines. Even so, the column densities of C,^{13}CO and CS agree well with Plume et al. (1994) and Snell et al. (1984a), and the C abundance is also in agreement with Franklin et al. (2008). The water abundance was previously estimated by Snell et al. (2000a) to be 9×10^{−9}, and by Ashby et al. (2000a) to be 2×10^{−8}, both very similar to the abundance calculated by RADEX.

The RADEX model is also tested for higher transitions of H_2O and shows that some lines are sensitive to various effects. For example, the intensity ratio of the 1661 and 1670 GHz lines appears to be sensitive to the total column density. When the internal radiation field is switched off in the models, the intensities of the transitions involving the lowest rotational levels increase slightly while the intensities of lines involving more highly excited states are diminished: in particular, the 1661 GHz line is enhanced by radiative excitation.

A series of excitation calculations with RADEX at small optical depths indicate that the intensity of the 2_{2,1} – 2_{1,2} line at 1661 GHz is very sensitive to the total column density: evidently photon-trapping is ineffective at column densities around 10^{14} cm^{−2} or less, so that this line would appear in absorption if the opacity in the 557 GHz transition is small.

The excitation of NH_3 also shows some interesting effects in these models. Due to the rather high density of C^+ ions, the reaction of C^+ with NH_3 will destroy ammonia at a rate exceeding 10^{−8} s^{−1}, which is rapid enough to affect the excitation of the metastable levels involved in several of the inver-

Table 3. Results of the homogeneous RADEX model for the narrow PDR component: column densities and abundances.^a

Species Column Density Abundance x N(x) X(x) [cm^{−2}]

H_2O 2.0 × 10^{14} 9.8 × 10^{−9} H^{18}_2 O < 4.9 × 10^{12} < 2.5 × 10^{−10} NH_3 1.5 × 10^{14} 7.5 × 10^{−9} 12CO 2.0 × 10^{18} 1.0 × 10^{−4} 13CO 2.9 × 10^{16} 1.4 × 10^{−6} CS 1.5 × 10^{14} 7.5 × 10^{−9} C 2.0 × 10^{17} 1.0 × 10^{−5} C^+ 9.0 × 10^{17} 4.5×10^{−5} O 6.3 × 10^{17} 3.2 × 10^{−5}

a All results for T_K = 55 K, n(H_2) = 4×10^5 cm^{−3}, n(e^−) = 7.7 cm^{−3}, N(H_2) = 2.0×10^{22} cm^{−2}.

sion transitions near 23 GHz. Indeed, the calculations indicate that the (J, K) = (3,3) inversion transition is a weak maser (cf. Walmsley & Ungerechts, 1983). In addition, NH_3 has strong vibrational transitions in the mid- and near-infrared. When these are included, the intensity of the 572 GHz transition is somewhat suppressed while the lowest inversion transitions are somewhat enhanced.

Table 4. Clumpy PDR model parameters.

size n_c(H) n_{ic}(H) F^a l^b_c T_{gas} T_{dust} [pc] [cm^{−3}] [cm^{−3}] [%] [pc] [K] [K]

0.5 2×10^6 1×10^4 8 0.03 9 – 40^c 18- 32^c 35 – 195^d

aVolume filling fraction of clumps. bClump size.

cTemperatures in clumps.

dTemperatures in interclump medium.

5. Model results: clumpy PDR model

A self-consistent physi-chemical 3D inhomogeneous model is used to compute the temperature of the gas and dust, and the abundance distributions inside the clumpy cloud (detailed descriptions are found in Spaans, 1996; Spaans & van Dishoeck, 1997; Poelman & Spaans, 2005). This clumpy PDR model has three free parameters; the volume filling factor F (fraction of the cloud that is occupied by clumps), a clump size l_c, and the clump-interclump ratio n_c(H)/n_{ic}(H). The total hydrogen density n_H = n(H) + 2n(H_2). In the dense clumps, hydrogen is entirely molecular, thus n(H) = 2n(H_2). The PDR model parameters used in this paper are given in Table 4. We use a velocity dispersion of 1.2 km s^{−1} (Zhou et al., 1994) equivalent to a FWHM line width of 2.0 km s^{−1} for an optically thin line. With an opacity of about 5 – 10 the line is broadened by a factor of ∼1.5 – 2 to 3 – 4 km s^{−1}, consistent with our observations. The incident radiation field is taken to be I_{UV} = 140 with respect to the Draine (1978) field. The clumps are randomly distributed in the interclump medium and the volume filling fraction is taken

C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite 9

to be 8% (Spaans & van Dishoeck, 1997; Ashby et al., 2000a; Poelman & Spaans, 2005). The grid size is 81x81x81, corresponding to a resolution of 0.006 pc and a total size of 0.5 pc (about 110^{′′} at a distance of 910 pc).

In the PDR computation, each clump is joined smoothly to the inter-clump medium through a power-law ∝1/R^2 density distribution. This envelope contains very little molecular material and the bulk of the impinging radiation field is always absorbed by the clumps and not the inter-clump medium. The definition of the mean H_2 density and the mean molecular abundances X of species x is thus made through < n > = Fn_c + (1 − F) n_{ic} and X_{mean}(x) = F X_c(x) + (1 − F) X_{ic}(x) to allow an unambiguous comparison with molecular line observations .

A high molecular hydrogen density of >∼1×10^6 cm^{−3} in the clumps is required to match the intensities observed by Odin and SWAS. Note that this clump density is considerably higher than that used by Poelman & Spaans (2005, 2006). The high density and clumpy medium suggested by our PDR model is, however, also supported by previous density estimates. For example, density variations between 10^4 – 10^6 cm^{−3} are necessary to explain the apparent coincidence of the C I and CO ridges as well as the distance between the C I ridge and the bright rim (Hayashi & Murata, 1992). Emission from numerous, small, dense (10^5 – 2×10^6 cm^{−3}) and optically thick clumps of gas, where the number density of clumps decreases with distance from the CS cloud centre close to IRS, is the best explanation of the CS column density variations, as well as the observed opacities and temperatures obtained from multitransition observations of CS (Snell et al., 1984a; Zhou et al., 1994). As molecular hydrogen density in the interclump medium we use 5×10^3 cm^{−3}.

Table 5. Resulting abundances with respect to n_{H2} for the narrow PDR components of water and ammonia from the clumpy PDR model.

Species Comp. n_{H2} Abundance [cm^{−3}]

H_2O Interclump 5.0×10^3 8.9×10^{−10} Clump 1.0×10^6 4.8×10^{−8} Mean 8.5×10^4 4.6×10^{−9} NH_3 Interclump 5.0×10^3 1.1×10^{−10} Clump 1.0×10^6 4.5×10^{−8} Mean 8.5×10^4 3.7×10^{−9}

The resulting abundances, with respect to H_2, in the clumps and the inter-clump medium, as well as a mean value over the whole region, are found in Table 5. The mean value is about half than found by RADEX. In the clumps, the water abundances vary between 10^{−7} – 10^{−9} with an average of 4.8×10^{−8}. The low density in the interclump medium results in low water abundances between 1×10^{−11} – 5×10^{−9} with an average of 8.9×10^{−10}. Ammonia is found to have about the same average abundance as water, 4.3×10^{−8}, in the clumps, while lower by almost an order of magnitude in the inter-clump medium, 1.1×10^{−10}.

The result from our PDR model is used as input to a threedimensional multi-zone escape probability method which computes the level populations of ortho- and para-H_2O (up to ∼350 K), CO and NH_3, as well as line intensities and opacities (Poelman & Spaans, 2005, 2006). The excitation due to dust emission is fully included. The dust temperature in the model varies between 18 and 32 K. However, due to geometry the highest T_{dust} is only achieved at the edge of the PDR and the dust

Fig. 6. Result of the PDR high-density model. The water intensity is shown in a logarithmic scale. The ionizing star is located on the left side of the displayed region.

Table 6. Observed and predicted T^∗_A in the PDR for o-H_2O(1_{1,0} – 1_{0,1}) with SWAS and Odin at the central position.

Satellite Obs. T^∗_A Pred. T^∗_A [mK] [mK]

SWAS 186 120 Odin 416 345

component fills only a small part of the region. The bulk of the dust has a temperature of about 25 K and the dust continuum opacity λ100 μm is 0.02 or smaller. Results from this code differ at most by 10% compared to other Monte Carlo/Accelerated Lambda Iteration codes. Fig. 6 shows the predicted water intensities on a logarithmic scale. Note that the ionizing star is located on the left side of the displayed region. The peak emission is found about 70 – 80^{′′} from the bright rim, in agreement with our observations of all species.

The resulting model intensities are then used to calculate the expected antenna temperature via

T^∗_A = 1 2 S A_{e f f} k Δν = 1 2 b η_{bf} Ω_{mb} k Δν λ^2 Ω_A = = 1 2 b λ^2 k Δν η_{bf} η_{mb} = b λ^3 2 k Δυ η_{mb} η_{bf} [K], (10)

where S is the integrated flux density in [erg s^{−1} cm^{−2}], the intensity b is in [erg s^{−1} cm^{−2} sr^{−1}], A_{eff} is the effective antenna area η_A A_{geo} = λ^2/Ω_A [cm^2], Δν is the observed line width in Hz, Ω_{mb} is the main beam solid angle in [sr], Δυ is the observed line width in cm s^{−1}, and the wavelength λ is in cm. We convolve the intensities to the Odin beam, and in addition predict the intensities of the forthcoming observations of the Herschel Space Observatory using a telescope diameter of 350 cm and a beam-efficiency of 0.7. The observed and modelled SWAS and

10 C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite

Fig. 7. Predicted antenna temperatures of the ortho-H_2O(1_{1,0} – 1_{0,1}) and para-H_2O(1_{1,1} – 0_{0,0}) transitions for the forthcoming Herschel-HIFI observations along a cut 20 – 100^{′′} from the bright rim.

Odin antenna temperatures for the 1_{1,0} – 1_{0,1} transition are provided in Table 6 for the central position. In addition, the predicted antenna temperatures for Herschel-HIFI of both the ortho- and para-H_2O 1_{1,0} – 1_{0,1} and 1_{1,1} – 0_{0,0} transitions along a cut from the bright rim are shown in Fig. 7.

The model ortho-water opacities are relatively low with a unweighted mean opacity of 17 over the entire source, with a range between 10^{−5} – 800.

The antenna temperatures from the PDR model agree well with our observations, especially considering uncertainties in source and clump size, as well as the volume filling fraction, which is the main uncertainty and can be varied to obtain slightly higher or lower T^∗_A. The dust background continuum is also lower than in the RADEX model, which diminishes the effect of radiative excitation of water. A clumpy medium with high clump densities above 10^6 cm^{−3} is, however, necessary to produce model antenna temperatures close to the observed values. This is also supported by the resulting low density of 3×10^4 cm^{−3} obtained by the dust model in Sect. 4 assuming a homogeneous, spherical cloud, which is about 7% of the density in our best fitting model.

6. Summary and conclusions

We have used the Odin satellite to observe water, ammonia and carbon-monoxide in the well-known molecular cloud S140. We have simultaneously observed five-point strip maps across the bright rim in S140 of the ortho-H_2O 1_{1,0} – 1_{0,1} and the ortho- NH_3 1_0 – 0_0 transitions, as well as CO(5 – 4) and^{13}CO(5 – 4). The NH_3 transition has never previously been observed in S140. Observations of H^{18}_2 O in the central position resulted in a nondetection at a rms level of 8 mK. As support observation we also mapped^{13}CO(1 – 0) with the Onsala 20m telescope.

Like CO, the water line-profile is dominated by emission from a NW – SE outflow, however, mainly in the red wing. Strong self-absorption is seen in the optically thick CO emission, while no obvious signs are seen in the ortho-H_2O, ortho-NH_3 or the almost optically thin^{13}CO line profiles. In addition to the outflow, our water line shows emission from a more extended NE – SW elongated PDR. Both these components originate approximately around our central position. No additional emission closer to the bright rim or further into the molecular cloud is detected. Close to the bright rim the temperature is most likely too high for a detection of our transition with an upper state energy of 61 K. Instead, higher-lying transitions, observable with the Herschel Space Observatory, will have their peak intensity shifted towards the bright rim (Poelman & Spaans, 2005, 2006). Even closer to the bright rim at a few magnitudes of A_V, water is, however, photo-dissociated by the UV field.

The ortho-NH_3 emission seems to emanate from the same high density clumps in the PDR and the outflow as water, but also shows additional emission further into the cloud where the ambient gas temperature drops to about 30 K. Compared to water in the central position, ammonia has a weaker outflow emission in the red wing although similar in the blue outflow. Close to the bright rim, where the outflow contribution to the emission is very low, the water and ammonia line profiles are almost identical, suggesting an origin in the same gas and velocity fields of the PDR. The^{13}CO line also shows a very similar line profile as H_2O and NH_3 in this position with a narrow line width of ∼3 km s^{−1}.

Abundances, with respect to H_2, in the PDR are estimated both with an enhanced version of the homogeneous RADEX code and with a clumpy PDR model. This model points to low mean water and ammonia abundances in the PDR of 5×10^{−9} and 4×10^{−9}, respectively. In the high-density clumps both the average water and ammonia abundances increase to 5×10^{−8}. To match the observed PDR antenna temperatures with Odin and SWAS, a clumpy medium is required by the model with a high molecular hydrogen density in the clumps of >∼1×10^6 cm^{−3}. The resulting RADEX mean abundances are twice as high: 1.0×10^{−8} and 8×10^{−8} for water and ammonia, respectively, using a molecular hydrogen density of 4×10^5 cm^{−3} and a kinetic temperature of 55 K. The differences most likely arise from the uncertainty in density, beam-filling, and volume filling of the clumps. The opacity of the narrow PDR component of the 1_{1,0} – 1_{0,1} transition is constrained by the narrow line width, and is estimated by RADEX to be ∼7. The PDR model also confirm a low water opacity with an unweighted mean opacity of 17 and a model range of ∼10^{−5} – 800. The mean outflow water abundance, derived from a simple two-level approximation, is higher than in the PDR by at least one order of magnitude, ∼2×10^{−8} – 2×10^{−7}.

Predictions of antenna temperatures for observations with HIFI are given by our PDR model of the ortho- and para-H_2O 1_{1,0} – 1_{0,1} and 1_{1,1} – 0_{0,0} transitions for nine positions across the bright rim, and are found to peak around 70 – 80^{′′} from the dissociation front in agreement with our observations.

Acknowledgements. We thank Per Bergman, Magnus Gustavsson, Matthijs Klomp and also Steve Shore and the organizers of the A&A and EDP sciences school: Scientific Writing for Young Astronomers for helpful discussions. Generous financial support from the Research Councils and Space Agencies in Sweden, Canada, Finland and France is gratefully acknowledged.

References

Ashby, M. L. N., Bergin, E. A., Plume, R., et al. 2000a, ApJ, 539, L119 Ashby, M. L. N., Bergin, E. A., Plume, R., et al. 2000b, ApJ, 539, L115 Bergin, E. A. 2003, in SFChem 2002: Chemistry as a Diagnostic of Star Formation, proceedings of a conference held August 21-23, 2002 at University of Waterloo, Waterloo, Ontario, Canada N2L 3G1. Edited by Charles L. Curry and Michel Fich. NRC Press, Ottawa, Canada, 2003, p. 63., ed. C. L. Curry & M. Fich, 63–+ Bergin, E. A., Kaufman, M. J., Melnick, G. J., Snell, R. L., & Howe, J. E. 2003, ApJ, 582, 830 Bergin, E. A. & Langer, W. D. 1997, ApJ, 486, 316 Bergin, E. A., Neufeld, D. A., & Melnick, G. J. 1998, ApJ, 499, 777 Blair, G. N., Evans, II, N. J., Vanden Bout, P. A., & Peters, III, W. L. 1978, ApJ, 219, 896 Boonman, A. M. S., Doty, S. D., van Dishoeck, E. F., et al. 2003, A&A, 406, 937

C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite 11

Boonman, A. M. S. & van Dishoeck, E. F. 2003, A&A, 403, 1003 Cernicharo, J. & Crovisier, J. 2005, Space Science Reviews, 119, 29 Crampton, D. & Fisher, W. A. 1974, Publications of the Dominion Astrophysical Observatory Victoria, 14, 283 Draine, B. T. 1978, ApJS, 36, 595 Emery, R., Aannestad, P., Minchin, N., et al. 1996, A&A, 315, L285 Faure, A., Crimier, N., Ceccarelli, C., et al. 2007, A&A, 472, 1029 Faure, A., Gorfinkiel, J. D., & Tennyson, J. 2004, MNRAS, 347, 323 Franklin, J., Snell, R. L., Kaufman, M. J., et al. 2008, ApJ, 674, 1015 Frisk, U., Hagström, M., Ala-Laurinaho, J., et al. 2003, A&A, 402, L27 Graf, U. U., Eckart, A., Genzel, R., et al. 1993, ApJ, 405, 249 Hayashi, M., Hasegawa, T., Omodaka, T., Hayashi, S. S., & Miyawaki, R. 1987, ApJ, 312, 327 Hayashi, M. & Murata, Y. 1992, PASJ, 44, 391 Keene, J., Blake, G. A., & Phillips, T. G. 1983, ApJ, 271, L27 Larsson, B., Liseau, R., Bergman, P., et al. 2003, A&A, 402, L69 Larsson, B., Liseau, R., Pagani, L., et al. 2007, A&A, 466, 999 Linke, R. A., Goldsmith, P. F., Wannier, P. G., Wilson, R. W., & Penzias, A. A.

1977, ApJ, 214, 50 Liseau, R., Larsson, B., Brandeker, A., et al. 2003, A&A, 402, L73 Melnick, G. J., Ashby, M. L. N., Plume, R., et al. 2000a, ApJ, 539, L87 Melnick, G. J., Stauffer, J. R., Ashby, M. L. N., et al. 2000b, ApJ, 539, L77 Minchin, N. R., Ward-Thompson, D., & White, G. J. 1995, A&A, 298, 894 Minchin, N. R., White, G. J., & Padman, R. 1993, A&A, 277, 595 Neufeld, D. A., Lepp, S., & Melnick, G. J. 1995, ApJS, 100, 132 Ney, E. P. & Merrill, K. M. 1980, AFGL Report, 80, 50 Nordh, H. L., von Schéele, F., Frisk, U., et al. 2003, A&A, 402, L21 Olberg, M., Frisk, U., Lecacheux, A., et al. 2003, A&A, 402, L35 Olofsson, A. O. H., Olofsson, G., Hjalmarson, Å., et al. 2003, A&A, 402, L47 Olofsson, A. O. H., Persson, C. M., Koning, N., et al. 2007, A&A, 476, 791 Persson, C. M., Olofsson, A. O. H., Koning, N., et al. 2007, A&A, 476, 807 Plume, R., Jaffe, D. T., & Keene, J. 1994, ApJ, 425, L49 Poelman, D. R. & Spaans, M. 2005, A&A, 440, 559 Poelman, D. R. & Spaans, M. 2006, A&A, 453, 615 Preibisch, T. & Smith, M. D. 2002, A&A, 383, 540 Rouan, D., Lena, P. J., Puget, J. L., de Boer, K. S., & Wijnbergen, J. J. 1977, ApJ, 213, L35 Sharpless, S. 1959, ApJS, 4, 257 Snell, R. L., Goldsmith, P. F., Erickson, N. R., Mundy, L. G., & Evans, II, N. J.

1984a, ApJ, 276, 625 Snell, R. L., Howe, J. E., Ashby, M. L. N., et al. 2000a, ApJ, 539, L101 Snell, R. L., Howe, J. E., Ashby, M. L. N., et al. 2000b, ApJ, 539, L93 Snell, R. L., Scoville, N. Z., Sanders, D. B., & Erickson, N. R. 1984b, ApJ, 284, 176 Spaans, M. 1996, A&A, 307, 271 Spaans, M. & van Dishoeck, E. F. 1997, A&A, 323, 953 Thronson, Jr., H. A., Lada, C. J., Smith, H. A., et al. 1983, ApJ, 271, 625 Trinidad, M. A., Torrelles, J. M., Rodríguez, L. F., & Curiel, S. 2007, AJ, 134, 1870 Ungerechts, H., Winnewisser, G., & Walmsley, C. M. 1986, A&A, 157, 207 van der Tak, F. F. S., Black, J. H., Schöier, F. L., Jansen, D. J., & van Dishoeck, E. F. 2007, A&A, 468, 627 Walmsley, C. M. & Ungerechts, H. 1983, A&A, 122, 164 Zhou, S., Butner, H. M., Evans, II, N. J., et al. 1994, ApJ, 428, 219 Zhou, S., Evans, II, N. J., Mundy, L. G., & Kutner, M. L. 1993, ApJ, 417, 613

C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite, Online Material p 1

Appendix A: RADEX – construction of a dust model

In order to relate the molecular column densities, N(x) of species x, to fractional abundances, X(x) = N(x)/N(H_2), a uniform, homogeneous sphere of diameter L = N(H_2)/n(H_2) is assumed here. The adopted physical diameter of the PDR corresponding to an angular diameter of 120^{′′} (Sect. 3) at a distance of 910 pc is 0.53 pc. This is assumed to be equal to the line-of-sight depth.

The observed intensity of the continuum is used to estimate the internal radiation field sensed by the molecules. We construct a simple model of the broad-band spectrum at submm and farinfrared wavelengths in order both to characterize the internal radiation and to estimate the total column densities of dust and hydrogen. Thronson et al. (1983) measured the far-infrared emission of S140 and found a peak flux density of the order of 10^4 Jy slightly shortward of λ100 μm in a 49^{′′} beam. Minchin et al. (1995) presented total broad-band fluxes in a 1.^′5 × 1.^′5 box. We represent the latter results with a two-component model of thermal emission by dust over a solid angle of Ω = 1.9 × 10^{−7} sr. The main component has a dust temperature T_{dust} = 40 K and a long-wavelength (λ > 40 μm) form of the opacity law

τ_{dust} = 0.0679(100/λ)^{1.2}

where λ is the wavelength in μm. The opacity law is smoothly matched to a standard interstellar extinction law at shorter wavelengths, which is also used to describe the second component at T_{dust} = 140 K. The opacity of the first dust component corresponds to a visual extinction A_V = 58.8 mag. The second component has a smaller optical depth A_V = 0.023 mag, but is assumed to cover the same solid angle. In addition, the mid-infrared measurements of Ney & Merrill (1980) have been adapted in order to specify the radiation field at even shorter wavelengths. In the calculations, the molecules are assumed to be exposed to an average intensity of continuous radiation

I_ν = B_ν(T_{CMB}) + η f^{dust}_ν Ω where B_ν is the Planck function, T_{CMB} = 2.73 K is the temperature of the cosmic background radiation, f^{dust}_ν is the flux density of the 2-component dust model, Ω = 1.9×10^{−7} sr, and η = 0.72 is a dilution factor to scale the brightness of the dust source to the larger beam area of the Odin measurements. It is important to keep in mind that we observe this strong far-infrared radiation; therefore, the co-extensive molecules must sense it also.

For the adopted interstellar extinction law and a standard gas/extinction ratio,

2N(H_2) = 1.6 × 10^{21}A_V cm^{−2},

the adopted dust model implies N(H_2) = 4.7×10^{22} cm^{−2} and an average density n(H_2) = 2.9×10^4 cm^{−3} over the source size L = 0.53 pc. This average density is, however, inconsistent with the observed molecular line emission in large beams (θ ≥ 1^′). Although a uniform RADEX model can be constructed based upon this density, the line-center optical depths of the pure rotational lines of H_2O and NH_3 would be of the order of 200 and 100, respectively. Such large opacities would imply significant line broadening through saturation of the emission, which conflicts with the observed narrow profiles of ∼3 km s^{−1}.

Appendix B: Figures and Tables

Fig. B.1. Odin observations of H^{18}_2 O in the central position.

Fig. B.2. Rotation diagram of the broad component of^{13}CO(1 – 0) with the Onsala 20-m telescope, J = 2 – 1 and J = 3 – 2 from Minchin et al. (1993), and J = 5 – 4 with Odin, producing T_{ROT} = 24±2 K and N_{ROT} = (2.5±0.4)×10^{16} cm^{−2}.

C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite, Online Material p 2

Table B.1. Observed transitions and their parameters^a in S140 with the Odin satellite in a five point NE-SW strip.

Species Transition Freq E_u A-coeff Δυ Pos. υ_{LSR} T_{peak} � T^∗_A dυ rms note [GHz] [K] [s^{−1}] [kms^{−1}] [kms^{−1}] [mK] [K kms^{−1}] [mK] H_2O 1_{1,0} – 1_{0,1} 556.936 61.0 3.46e-3 0.27 1 -8.0 207 0.64 39 2 -6.9 517 2.74 68 3 -6.6 632 3.34 19 4 -7.0 379 1.84 57 5 – – – 44 No detection.

H^{18}_2 O 1_{1,0} – 1_{0,1} 547.676 60.5 3.29e-3 0.34 3 – – – ∼8 No detection. CO 5 – 4 576.258 83.0 1.22e-5 0.32 1 -5.4 6 680 47.1 67 2 -5.0 11 760 94.2 47 3 -5.5 13 240 108.8 43 4 -6.6 8 690 60.1 50 5 -6.9 2 220 10.1 160 13CO 5 – 4 550.926 79.3 1.10e-5 0.27 1 -7.8 2 740 8.29 115 2 -7.4 5 930 21.4 81 3 -7.4 7 110 27.7 61 4 -7.6 3 640 13.2 119 5 -8.5 1 190 2.5 291 NH_3 1_0 – 0_0 572.498 27.5 1.61e-3 0.32 1 -8.0 444 1.18 99 2 -7.4 467 1.83 33 3 -7.4 588 2.66 29 4 -7.3 381 1.86 36 5 – – – 91 No detection

a Transition = the quantum numbers for the transition; Freq = rest frequency of the transition; E_u = the upper state energy; Acoeff = the Einstein A-coefficient; Δυ = the velocity resolution; Pos = the strip position from NE to SW. υ_{LSR} = the peak LSR velocity; T_{peak} = the observed peak temperature of the transition; � T^∗_A dυ = the integrated intensity from the observed spectra not corrected for beam-efficiency or beam-filling;

rms = noise.

Fig. B.3. Rotation diagram of the narrow component of 13CO(2 – 1) and J = 3 – 2 from Minchin et al. (1993), J = 5 – 4 with Odin, and J = 6 – 5 from Graf et al. (1993), producing T_{ROT} = 69±27 K and N_{ROT} = (3.2±1.8)×10^{16} cm^{−2}.^{13}CO(1 – 0) is not included in the fit.

Fig. B.4. Gaussian fits to^{13}CO(5 – 4) at the central position. The widths, amplitudes and centre velocities are 3.2 km s^{−1} and 8.2 km s^{−1}; 6.610 K and 0.612 K; −7.3 km s^{−1} and −6.8 km s^{−1}, respectively.

C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite, Online Material p 3

Fig. B.5. Gaussian fits to the convolved (to the Odin 126^{′′} beam) spectra of^{13}CO(1 – 0) at position 1. The widths, amplitudes and centre velocities are 2.7 km s^{−1} and 8.6 km s^{−1}; 6.982 K and 0.395 K; −7.6 km s^{−1} and −8.0 km s^{−1}, respectively.

Fig. B.6. Gaussian fits to H_2O at the central position. The widths, amplitudes and centre velocities are 3.1 km s^{−1} and 8.8 km s^{−1}; 416 mK and 213 mK; −7.1 km s^{−1} and −6.1 km s^{−1}, respectively.

Fig. B.7. Gaussian fits to NH_3 at the central position. The widths, amplitudes and centre velocities are 3.3 km s^{−1} and 8.5 km s^{−1}; 487 mK and 100 mK; -7.6 km s^{−1} and -6.4 km s^{−1}, respectively.

C.M. Persson et al.: Water and ammonia abundances in S140 with the Odin satellite, Online Material p 4

Table B.2.^{13}CO Gaussian fits^a. T_b uses a source size for the PDR (narrow component) of 120^{′′}→ η_{bf} = 2, and a source size for the broad outflow component of 85^{′′}→ η_{bf} = 3.

Pos. υ_{LSR} err T_A∗ T_b err Δυ err [km s^{−1}] [km s^{−1}] [mK] [mK] [mK] [km s^{−1}] [km s^{−1}] 1 -7.7 0.04 2 665 5 920 68 2.8 0.08 2 -7.3 0.02 5 877 13 060 56 3.3 0.04 3 -7.3 0.01 6 610 14 690 199 3.2 0.07 3 -6.8 0.33 612 2 040 207 8.2 1.54 4 -7.3 0.03 3 620 8 040 66 3.5 0.07 5 -8.2 0.25 1 124 2 500 282 2.1 0.62

a Gaussian fits (including errors) to the spectra in 5 positions. For most positions two Gaussians are needed to fit the spectra. Parameters:

υ_{LSR} = the LSR velocity at the peak temperature, amp = the amplitude of the Gaussian fit, Δυ = FWHM line width.

Table B.3. H_2O Gaussian fits^a. T_b(PDR) uses a source size of 120^{′′}→ η_{bf} = 2, while T_b(outflow) uses a source size of 85^{′′}→ η_{bf} = 3.

Pos. υ_{LSR} err T_A∗ T_b err Δυ err [km s^{−1}] [km s^{−1}] [mK] [mK] [mK] [km s^{−1}] [km s^{−1}] 1 -7.5 0.10 180 400 12 3.1 0.2 2 -6.9 0.08 340 756 28 3.5 0.3 -5.4 0.39 171 570 27 8.8 0.7 3 -7.1 0.06 416 924 30 3.1 0.20 -6.1 0.24 213 710 31 8.8 0.60 4 -7.1 0.08 316 702 44 3.5 0.4 -6.6 0.8 78 260 45 10.0 4.1

a Notation as in Table B.2 .

Table B.4. NH_3 Gaussian fits^a. T_b(PDR) uses a source size of 120^{′′}→ η_{bf} = 2, while T_b(outflow) uses a source size of 85^{′′}→ η_{bf} = 3.

Position υ_{LSR} err T_A∗ T_b err Δυ err [km s^{−1}] [km s^{−1}] [mK] [mK] [mK] [km s^{−1}] [km s^{−1}] 1 -7.5 0.14 438 973 46 2.6 0.3 2 -7.9 0.25 412 916 200 3.3 0.9 -6.1 3.4 111 370 160 5.8 2.6 3 -7.6 0.12 487 1 080 90 3.3 0.50 -6.4 1.4 100 333 92 8.5 4.3 4 -7.4 0.23 321 713 185 3.9 1.2 -6.8 2.6 61 203 192 8.7 12.1

a Notation as in Table B.2 .