arXiv:0912.3498v1 [astro-ph.HE] 17 Dec 2009

Swift/BAT monitoring of Fermi/LAT sources

Hans A. Krimm CRESST, Universities Space Research Association and NASA GSFC, Greenbelt, MD 20771, USA

Scott D. Barthelmy, Neil Gehrels, Jack Tueller NASA Goddard Space Flight Center, Greenbelt, MD 20771, USA

Wayne H. Baumgartner, Jay R. Cummings, Taka Sakamoto CRESST, University of Maryland, Baltimore County and NASA GSFC, Greenbelt, MD 20771, USA

Edward E. Fenimore, David M. Palmer Los Alamos National Laboratory, P.O. Box 1663, Los Alamos, NM 87545, USA

Craig B. Markwardt, Gerald K. Skinner CRESST, University of Maryland, College Park and NASA GSFC, Greenbelt, MD 20771, USA

Michael Stamatikos NASA Goddard Space Flight Center and Ohio State University, Columbus, OH 43210, USA

The Swift Burst Alert Telescope (BAT) hard X-ray transient monitor tracks more than 700 galactic and extragalactic sources on time scales ranging from a single Swift pointing (approximately 20 minutes) to one day. The monitored sources include all objects from the Fermi LAT bright source list which are either identified or which have a 95% error confidence radius of less than eight arc minutes. We report on the detection statistics of these sources in the BAT monitor both before and after the launch of Fermi.

I. THE SWIFT/BAT HARD X-RAY SURVEY

The Swift/BAT Hard X-ray Survey [3, 4] uses the full Swift/BAT data in eight energy ranges (covering 14- 195 keV) to produce a map (mosaic) of the full sky. The primary goal of the BAT Survey is to make a complete census of nearby AGN down to a 4.8σ sensitivity of 2.2×10^{−11}erg cm^{−2}s^{−1} (1 mCrab). The current published results cover the first 22 months of the Swift mission from December 2004 through September 2006. The data used in this paper cover the first 36 months (through November 2007) and processing is underway to complete the full 60 months of the mission to date. Although sources are only announced if they are at least 4.8σ, we have used the sky maps to search for lower level emission from the 175 sources in the LAT Bright Source list which are included in the BAT Monitor catalog. Other work which correlates BAT and LAT blazar detections has been done by Sambruna et al (in preparation) who have used BAT and LAT spectral fits to argue in favor of the “blazar sequence” relating the X-ray and γ-ray continua.

II. SUMMARY OF RESULTS

• Using a low threshold, we find that BAT can detect 31 of the 108 identified blazars in the LAT Bright Source Catalog and 18 other sources

• Given the significance distribution, we expect that many more blazars will be detected as the BAT Survey and Monitor become more sensitive

• Preliminary blazar SEDs in the Swift energy range are consistent with the standard models of FSRQ and BL Lac blazar types

III. DISTRIBUTION OF BAT SIGNIFICANCES

The histograms in Figure 1 are derived from the Swift/BAT Hard X-ray Transient Monitor (top) and Swift/BAT Hard X-ray Survey (bottom). The plots on the left show sources in the first Fermi/LAT Bright Source List and the plots on the right show sources from 106 “blank sky” points in the Transient Monitor catalog. The blank sky points are distributed randomly across the sky and each point has been checked against all of the X-ray catalogs in Simbad (http://simbad.u-strasbg.fr/simbad/sim-fid) to ensure that there is no hard or soft X-ray source nearby.

To create the Transient Monitor histograms, we have calculated the mean daily average count rate for each source and divided by the mean count rate for a source one thousandth the rate of the Crab (2.22 × 10^{−4} ct cm^{−2}s^{−1}). The histograms are colorcoded for source type, with black representing the sum of the three categories. For non-detections, these

FIG. 1: Histograms of count rates and signal-to-noise ratios (SNR) for Fermi/LAT bright sources from the Swift/BAT Hard X-ray Transient Monitor and Hard X-ray Survey. Top Left: Histogram of the average count rate derived for each Fermi/LAT bright source in the BAT Transient Monitor. Note the asymmetry in the distribution. The dashed vertical line to the right indicates the detection threshold of 2σ. Top Right: A similar distribution for “blank sky” points in the monitor catalog. The distribution is narrower than the one on the left because these sources were monitored for a longer period. Bottom Left: A distribution of SNR from the BAT Survey, again showing a pronounced positive excess. Bottom Right: The distribution for the blank sky points shows no such asymmetry.

means are centered on zero (top right of Fig 1). By contrast, for the LAT bright sources, there is a strong bias toward the positive side, telling us that a high percentage of these sources are detected. In the top left of Fig 1 there are 35 sources at > 2σ (including 12 off the plot to the right), compared to 4 expected. This enables us to set a low detection threshold, as indicated by the dashed vertical line to the right, corresponding to 0.68 mCrab. The width of the blank sky distribution is smaller than that of the Fermi bright sources for the following reason. Light curves for the blank sky points have been accumulated since near the start of the Swift mission (57 months since Feb. 2005), while light curves for most of the LAT sources have only been accumulated for only 9 months since the release of the first LAT bright source catalog. Thus the distribution of means is tighter.

A similar pair of histograms are created from the results of the 36-month Swift/BAT Hard X-ray Survey[5]. In these plots, the histograms are based on the signal-to-noise ratio (SNR) for each source. Therefore, the blank-sky histogram has a mean near zero and width near unity. The fit to the blank-sky histogram is overlaid on the bright-source histogram. For the survey, with a sensitivity about twice that of the monitor (due mostly to the longer collection time), we see an even greater asymmetry to the positive side. This suggests that a large number of the LAT blazars are in fact detected in the BAT and that many more will be detected as the Survey and Monitor run longer and become more sensitive. The dashed vertical line to the right indicates 2σ.

IV. RELATION OF BAT AND LAT FLUXES

Figure 2 shows that there is little or no correlation between the LAT 100 MeV to 1 GeV flux and the BAT 15-50 keV rate. This is not surprising, since the relationship between these two quantities depends strongly on where the peak lies in the spectral energy distribution for each blazar. A few points can be gleaned from this figure. First of all, most of the BATdetected BL Lacs (such as Mrk 421 and Mrk 501) are relatively faint in the LAT, while BAT tends to detect more of the brighter LAT flat-spectrum radio quasars. Also, none of the unknown type blazars are detected in the BAT.

V. SPECTRAL ENERGY DISTRIBUTIONS

For 27 of the BAT-detected blazars, we have produced preliminary spectral energy distributions (SED) in the energy ranges of Swift XRT and BAT. The XRT points were taken from a single Swift observation (the one with the longest exposure time) and the unabsorbed flux and photon index were derived using the web interface developed by Phil Evans at the UK Swift Science Data Centre at the University of Leicester[1, 2]. For four blazars (PKS 1830-211, PKS 0142-278, B3 2322+396 and PKS 2023-07) there were either no XRT observations in the archive or we were unable to adequately fit the spectrum. The BAT SED points were derived using WebPIMMS (http://heasarc.gsfc.nasa.gov/Tools/w3pimms.html) to convert from the BAT average 14-195 keV count rate to the flux density at 100 keV. Thus Fig 3 does mix an XRT point at a single time with a mean BAT point. Given the variations in blazar outputs, a more proper analysis (see Future Work) will include, where possible, more closely coincident spectral analysis.

For most flat-spectrum radio quasars (FSRQs), BAT appears to be on the rising part of the Compton peak, though for the brightest two (3C 273 and 3C 454.3), BAT is near the top of Compton peak. For several of the high-frequency peaked BL Lacs (Mrk 421, Mrk 501, QSO B0033+595), the BAT appears to be on the falling edge of the synchrotron peak. For others the dip in the SED is apparently below the BAT energy range, so the BAT points are again on the rising part of the Compton peak.

VI. FUTURE WORK

• Re-run the BAT Transient Monitor to get complete light curves for all LAT bright sources back to the start of the Swift mission

• Derive BAT spectral fits from the 8-channel BAT Survey results

• Look for source time variability and either derive time-integrated XRT spectral fits or timeresolved BAT spectral fits

• Look for temporal BAT-LAT correlations for the brightest BAT sources

• Further study individual blazars and relate BAT results to what is known about particular sources and source classes.

VII. DATA TABLES

The BAT results are shown in two tables. In Table I, we list the 49 LAT sources which are detected in either the BAT monitor or BAT survey with the criteria that either the source is seen at at least 0.64 mCrab in the BAT Transient Monitor or at > 3σ in the BAT Survey. The common name and the source name in the Fermi/LAT Bright Source List are listed, along with the source type from the LAT[6]. The results from the BAT Monitor are given in mCrab and from the BAT Survey in SNR. The XRT flux and photon index were derived for the blazars (see Section V for details).

For two sources (noted with an asterisk), the LAT identification is with a region of the sky that contains the source listed: the Galactic Center region for Sgr A∗ and the Large Magellanic Cloud for LMC X-1. The BAT results are given for the individual sources, although there is still confusion at the BAT resolution for the Galactic Center.

One pulsar (PSR J2124-3358) and three of the four unidentified LAT sources in the table have BAT Survey SNR < 0, but a possible detection in the BAT Monitor. This tells us that these sources are probably variable in the hard X rays, which is suggestive of their being galactic transient sources.

Table II shows the 20 brightest LAT sources overall and the 20 brightest blazars. BAT-detected sources are indicated in bold and undetected sources in italics. The LAT fluxes in the two bands are scaled to the average flux in each band and the rankings are based on the 100 MeV to 1 GeV flux. Only about half of the brightest LAT blazars are detected in the BAT, although most of the sources in the list have BAT Survey significance above 1.7σ, so are likely to be detected in a deeper survey.

[1] Evans, P. A. et al, MNRAS, submitted, arXiv:0812.3662 [2] http://www.swift.ac.uk/user objects. [3] Tueller, J. et al, 2009, arXiv0903.3037 [4] http://swift.gsfc.nasa.gov/docs/swift/results/bs22mon/

[5] Tueller, J. et al, 2010, in preparation [6] PSR=pulsar; rdg=radio galaxy; bzq=FSRQ blazar;

bzb=BL Lac; x=special case; HXB=high-mass X-ray binary; NONE=no type listed in LAT source list

4 2009 Fermi Symposium, Washington, D.C., Nov. 2-5

FIG. 2: The Fermi flux (scaled to the mean flux) in the 100 MeV – 1 GeV band is plotted relative to the BAT Monitor count rate in mCrab. The vertical line indicates our BAT detection threshold. We see no apparent correlation here, which is not surprising, given that the relationship between BAT and LAT flux depends strongly on where the peaks in the spectral energy distributions lie.

eConf C091122

FIG. 3: Preliminary spectral energy distributions (SED) for BAT-detected blazars based on BAT and XRT observations.

6 2009 Fermi Symposium, Washington, D.C., Nov. 2-5

TABLE I: Swift/BAT detections of Fermi/LAT bright sources

Name Fermi name Type BAT monitor BAT survey XRT flux XRT photon index mCrab SNR erg cm^{−2}s^{−1} Crab J0534.6+2201 PSR 1000.00 4605.02 – – Cen A J1325.4-4303 rdg 46.27 194.37 – – 3C 273 J1229.1+0202 bzq 11.28 101.78 2.90 × 10^{−10} 1.64 ∗ Sgr Astar J1746.0-2900 NONE 7.79 32.87 – – Vela Pulsar J0835.4-4510 PSR 5.73 45.46 – – Mrk 421 J1104.5+3811 bzb 5.71 60.09 1.40 × 10^{−09} 1.80 NGC 1275 J0320.0+4131 rdg 4.51 30.88 – – 3C 454.3 J2254.0+1609 bzq 3.82 30.70 9.00 × 10^{−11} 1.44 Mrk 501 J1653.9+3946 bzb 2.68 16.23 1.40 × 10^{−10} 2.11 ∗ LMC X-1 J0538.4-6856 NONE 2.42 10.70 – – PKS 1830-211 J1833.4-2106 bzq 2.15 9.98 – – QSO J1512-0906 J1512.7-0905 bzq 2.05 9.08 1.20 × 10^{−11} 1.17 QSO B0033+595 J0036.7+5951 bzb 1.71 8.67 1.30 × 10^{−10} 2.06 1ES 1959+650 J2000.2+6506 bzb 1.67 13.41 3.50 × 10^{−10} 2.46 PKS 2325+093 J2327.3+0947 bzq 1.40 6.05 3.50 × 10^{−12} 1.49 QSO B1502+1041 J1504.4+1030 bzq 1.34 5.53 1.00 × 10^{−12} 1.40 PSR J1418-60 J1418.8-6058 PSR 1.21 2.52 – – PKS 0142-278 J0145.1-2728 bzq 1.17 2.99 – – 0FGL J1830.3+0617 J1830.3+0617 NONE 1.14 -0.56 – – RX J1826.2-1450 J1826.3-1451 hxb 1.14 3.86 – – QSO J1130-1449 J1129.8-1443 bzq 1.12 11.04 1.00 × 10^{−11} 1.54 B3 2322+396 J2325.3+3959 bzb 1.00 0.87 – – QSO B2200+420 J2202.4+4217 bzb 0.98 8.09 2.90 × 10^{−11} 1.98 0FGL J1834.4-0841 J1834.4-0841 x 0.96 1.52 – – 3C 279 J1256.1-0547 bzq 0.96 8.03 1.60 × 10^{−11} 1.75 PMN J0948+0022 J0948.3+0019 bzq 0.96 1.38 3.80 × 10^{−12} 1.67 PKS 1329-049 J1331.7-0506 bzq 0.94 4.19 3.40 × 10^{−12} 1.69 PSR J1826-1256 J1825.9-1256 PSR 0.88 0.79 – – 2CG 135+01 J0240.3+6113 HXB 0.77 9.88 – – 0FGL J1231.5-1410 J1231.5-1410 NONE 0.76 -0.44 – – PSR J2124-3358 J2124.7-3358 PSR 0.75 -0.42 – – QSO J0217+0144 J0217.8+0146 bzq 0.72 2.11 3.30 × 10^{−12} 1.67 0FGL J1413.1-6203 J1413.1-6203 NONE 0.71 -1.58 – – PKS 0528+134 J0531.0+1331 bzq 0.69 2.84 7.30 × 10^{−12} 1.60 4C 11.69 J2232.4+1141 bzq 0.69 6.66 6.60 × 10^{−12} 1.67 PSR J1509-5850 J1509.5-5848 PSR 0.68 0.81 – – PSR J1809-2332 J1809.5-2331 PSR 0.67 0.88 – – PSR B1706-44 J1709.7-4428 PSR 0.67 2.45 – – PKS 0227-369 J0229.5-3640 bzq 0.66 1.75 1.60 × 10^{−12} 1.49 PKS 1244-255 J1246.6-2544 bzq 0.65 1.65 2.50 × 10^{−12} 2.46 QSO B2052-474 J2056.1-4715 bzq 0.57 3.45 4.90 × 10^{−12} 1.62 QSO B0917+449 J0921.2+4437 bzq 0.50 3.05 5.10 × 10^{−12} 2.04 QSO B1514-241 J1517.9-2423 bzb 0.46 4.51 5.70 × 10^{−12} 1.70 QSO B0537-441 J0538.8-4403 bzb 0.36 5.73 1.40 × 10^{−11} 1.82 QSO B2227-0848 J2229.8-0829 bzq 0.34 4.85 4.50 × 10^{−12} 1.55 QSO B0716+714 J0722.0+7120 bzb 0.30 3.60 6.00 × 10^{−12} 2.66 PKS 2023-07 J2025.6-0736 bzq 0.22 4.01 – – QSO B2201+1711 J2203.2+1731 bzq 0.19 3.13 1.10 × 10^{−12} 1.64 8C 1849+670 J1849.4+6706 bzq 0.04 3.27 3.50 × 10^{−12} 1.92 eConf C091122

2009 Fermi Symposium, Washington, D.C., Nov. 2-5 7

TABLE II: The Brightest Fermi/LAT bright sources

Name Fermi name Type LAT Flux (scaled) LAT flux (scaled) BAT survey (100 MeV – 1 GeV 1 GeV – 100 GeV SNR Overall Brightest sources Vela Pulsar J0835.4-4510 PSR 27.60 42.35 45.46 Geminga J0634.0+1745 PSR 9.84 23.28 0.97 3C 454.3 J2254.0+1609 bzq 7.28 3.71 30.70 Crab J0534.6+2201 PSR 7.01 5.82 4605.02 PSR J2021+4026 J2021.5+4026 PSR 4.25 4.00 -1.00 Sgr Astar J1746.0-2900 NONE 4.03 2.99 32.87 PSR B1706-44 J1709.7-4428 PSR 3.96 5.98 2.45 PSR J1826-1256 J1825.9-1256 PSR 3.27 2.18 0.79 0FGL J1855.9+0126 J1855.9+0126 x 3.06 2.62 0.80 0FGL J1801.6-2327 J1801.6-2327 x 2.55 1.70 -0.22 PSR J2021+3651 J2020.8+3649 PSR 2.54 2.37 1.41 2CG 135+01 J0240.3+6113 HXB 2.42 1.26 9.88 RX J1826.2-1450 J1826.3-1451 hxb 2.32 0.93 3.86 3C 273 J1229.1+0202 bzq 2.20 0.61 101.78 QSO B1502+1041 J1504.4+1030 bzq 2.18 2.21 5.53 AO 0235+16 J0238.6+1636 bzb 2.09 2.57 1.74 0FGL J1813.5-1248 J1813.5-1248 NONE 1.85 1.05 0.08 0FGL J1839.0-0549 J1839.0-0549 NONE 1.77 1.53 -0.62 PSR J2032+41 J2032.2+4122 PSR 1.76 1.16 1.88 QSO J1512-0906 J1512.7-0905 bzq 1.68 0.70 9.08 Brightest blazars 3C 454.3 J2254.0+1609 bzq 7.28 3.71 30.70 3C 273 J1229.1+0202 bzq 2.20 0.61 101.78 QSO B1502+1041 J1504.4+1030 bzq 2.18 2.21 5.53 AO 0235+16 J0238.6+1636 bzb 2.09 2.57 1.74 QSO J1512-0906 J1512.7-0905 bzq 1.68 0.70 9.08 PKS 2023-07 J2025.6-0736 bzq 1.40 0.83 4.01 PKS 1830-211 J1833.4-2106 bzq 1.34 0.39 9.98 PKS 0454-234 J0457.1-2325 bzq 1.17 0.99 1.77 QSO B0537-441 J0538.8-4403 bzb 1.09 0.95 5.73 PKS 1454-354 J1457.6-3538 bzq 1.03 0.76 2.11 3C 279 J1256.1-0547 bzq 0.97 0.54 8.03 QSO J0730-116 J0730.4-1142 bzq 0.90 0.66 1.74 3C 66A J0222.6+4302 bzb 0.82 0.99 2.40 PKS 0528+134 J0531.0+1331 bzq 0.79 0.29 2.84 QSO B0208-5115 J0210.8-5100 bzq 0.74 0.51 1.15 TXS 1520+319 J1522.2+3143 bzq 0.73 0.40 2.15 PKS 0426-380 J0428.7-3755 bzb 0.73 0.75 2.14 PMN J1802-3940 J1802.6-3939 bzb 0.66 0.56 -0.62 B3 0650+453 J0654.3+4513 bzq 0.66 0.48 -0.46 PKS 1622-253 J1625.8-2527 bzq 0.66 0.24 1.59

eConf C091122