arXiv:1003.3388v4 [quant-ph] 9 Jun 2010

Single-photon emission from Ni-related color centers in CVD diamond

David Steinmetz*^a, Elke Neu^a, Christian Hepp^a, Roland Albrecht^a, Wolfgang Bolse^b, Jan Meijer^c, Detlef Rogalla^c and Christoph Becher^a

aUniversität des Saarlandes, Fachrichtung 7.3 (Technische Physik), Campus E2.6, 66123 Saarbrücken, Germany;

bUniversität Stuttgart, Institut für Halbleiteroptik und Funktionelle Grenzflächen, Allmandring 3, 70569 Stuttgart, Germany;

cRUBION, Ruhr-Universität Bochum, Universitätsstraße 150, 44780 Bochum, Germany

ABSTRACT Color centers in diamond are very promising candidates among the possible realizations for practical singlephoton sources because of their long-time stable emission at room temperature. The popular nitrogen-vacancy center shows single-photon emission, but within a large, phonon-broadened spectrum (≈ 100 nm), which strongly limits its applicability for quantum communication. By contrast, Ni-related centers exhibit narrow emission lines at room temperature. We present investigations on single color centers consisting of Ni and Si created by ion implantation into single crystalline IIa diamond. We use systematic variations of ion doses between 10^8 cm^{−2} and 10^{14} cm^{−2} and energies between 30 keV and 1.8 MeV. The Ni-related centers show emission in the near infrared spectral range (≈ 770 nm to 787 nm) with a small line-width (≈ 3 nm FWHM). A measurement of the intensity correlation function proves single-photon emission. Saturation measurements yield a rather high saturation count rate of 77.9 kcounts/s. Polarization dependent measurements indicate the presence of two orthogonal dipoles.

Keywords: single photons, color center, diamond, nickel

1. INTRODUCTION In recent years, single-photon sources have attracted great interest because of the numerous possible applications in quantum information processing, including quantum metrology, quantum computation and quantum communication. As an example the BB84 -protocol for quantum key distribution^1 (QKD) is based on the usage of single quantum systems to guarantee absolute security against an eavesdropper. If single photons are used as these “quantum systems”, one requires a single-photon source that can be triggered, features a high emission rate to assure fast information transmission and exhibits a low spectral line-width to allow an effective signal filtering. If weak laser pulses are used as quasi-single photons a general problem arises due to their Poissonian photon statistics, i. e. that one pulse can contain more than one photon even if their mean photon number is smaller than one. In principle, the most obvious way to overcome this is the use of true single-photon sources, that can be realized by single emitting quantum systems. If such a dipole undergoes cycles of pulsed excitation, light emission and re-excitation before emitting the next photon, triggered single-photon emission can be realized. Admittedly, many of the existing demonstrations like single ions,^2 single atoms,^3 single molecules,^4 single quantum dots^5 or even carbon nanotubes^6 hold experimental complexity that limits their suitability for practical applications.

Compared to these candidates, color centers in diamond have the greatest potential for feasible single-photon sources. Color centers are point defects, that consist of combinations of impurity atoms and vacancies in the carbon lattice of diamond. These complexes can form discrete electronic levels within the band gap, which has a size of 5.5 eV and makes diamond transparent in the visible and infrared spectrum.^7 Because of its superior

*Send correspondence to d.steinmetz@physik.uni-saarland.de hardness, diamond exhibits a high Debye temperature of 1860 K,^8 so there is only small coupling of the color centers to the surrounding lattice leading to an atom-like spectrum consisting of narrow emission even at high temperatures.^7 In addition the high photostability of many color centers offers the great advantage of long-time stable single-photon emission at room temperature (RT).^9

Among the over 500 known color centers in diamond, there are three candidates for single-photon emitters that are intensively explored. The so called Nitrogen-Vacancy center (NV) is the most investigated one (and used in the first commercial single-photon source^∗). Beyond single-photon emission^{10} several key experiments towards quantum information have been performed yet, including the realization of a two-qubit gate^{11} and multipartite entanglement.^{12} However, NV centers have the detrimental property of a broad emission bandwidth of ≈ 100 nm due to vibronic coupling to the diamond lattice – the zero-phonon line only amounts to 3 % of the whole emission rate. This fact strongly limits their suitability for applications in quantum information. The Silicon-Vacancy center (SiV) shows enhanced spectral properties (≈ 10 nm line-width) but a long-lived shelving state leads to a decreased maximum emission rate^{13} which does not make the SiV very promising, either.

A very auspicious kind of color centers for single-photon sources are nickel-related centers. NE8 centers that consist of one Ni atom and four N atoms were first found in HPHT diamonds where Ni is used as a catalyst for the crystal growth.^{14} Single Ni-related color centers have been observed in natural IIa type diamond, showing a 1.2 nm narrow line around 800 nm at RT,^{15} but have also been fabricated by CVD growth of a poly-crystalline diamond film on a fused-silica substrate seeded with a slurry containing Ni.^{16} For single Ni-related emitters, photon anti-bunching^{15} and triggered single-photon emission^{17} have been demonstrated. Investigations of color centers consisting of Ni and possibly Si in nano-crystals yielded high saturation count rates of 200 kcounts/s at an emission wavelength of 768 nm with an excited-state lifetime of 2 ns.^{18}

However, targeted placing of single emitters for applications in quantum information, e. g. for coupling to photonic nanostructures,^{19} requires their deterministic creation in bulk diamonds. We present the results of experiments on Ni-related color centers which are created via ion implantation in single crystalline CVD diamonds. Furthermore we investigate the influence of the implantation parameters and discuss the optical properties of single Ni-related centers with regard to their applicability as single-photon sources.

2. EXPERIMENTAL For our investigations we used type IIa CVD single-crystal plates (Element Six, Isle of Man). They are specified with a nitrogen mass content of less than 1 ppm and a boron mass content of less than 0.05 ppm.

Ni ions were implanted with energies between 30 keV and 1810 keV and doses between 2 × 10^8 ions/cm^2 and 10^{14} ions/cm^2. Monte Carlo simulations (SRIM^†) yield mean Ni implantation depths between 16 nm (30 keV) and 793 nm (1810 keV). Implantations with energies up to 400 keV were performed at the Georg-August Universität (Göttingen, Germany), higher energy implantations at the RUBION (Ruhr-Universität, Bochum, Germany). After implantation, the samples were annealed at 1000^∘C in vacuum for one hour followed by 15 minutes of cleaning in oxygen plasma to remove graphite from the sample surface formed during the annealing.

To analyze our diamond samples we use a home-built confocal microscope: The fluorescence is excited with a cw 671 nm DPSS laser through a microscope objective with NA = 0.8. A dichroic mirror and dielectric filters block the excitation light from entering the analyzing beam path and allow only fluorescence light with λ > 720 nm to pass. The fluorescence can be guided into a grating spectrometer to analyze the fluorescence spectrum. Time correlation of the photoluminescence signal can be measured with a Hanbury-Brown-Twiss setup (HBT) consisting of two single-photon sensitive avalanche photodiodes (APDs, Perkin Elmer SPCM-AQR-14) on each side of a 50/50 beam splitter. Bandpass filters were placed in front of the APDs to prevent crosstalk. A fast counting electronics (PicoQuant PicoHarp 300) records two lists of photon arrival times; by correlation of these lists one gets a histogram of time delays between the arrival of single photons. It can be normalized to Poissonian statistics by the factor 1/(N_1N_2wT ), where N_{1,2} are the count rates of each APD, w is the time-bin-width of the

∗Quantum Communications Victoria: http://qcvictoria.com/ †Stopping range of ions in matter: http://www.srim.org/

(a) (b)

Figure 1: (a) Depth scan of three samples implanted with Ni and Si at a dose of 10^{12} cm^{−2} and different energies.

In the region of the mean implantation depth the high ion radiation damage background in the sample implanted with the higher energies is obvious. (b) Depth scans of three samples implanted with Ni and Si at three different doses. Despite the low implantation energies of 86 keV, 56 keV respectively the background is clearly visible for the samples with the higher doses.

histogram, T is the complete correlation time.^{20} After correction of random coincidences due to uncorrelated background emission^{20} one yields the second-order correlation function

g^{(2)}(τ) =

⟨I(t)I(t + τ)⟩ ⟨I(t)⟩^2 (1) of the fluorescence light, representing the probability to detect two photons in the time interval τ. Due to the timing jitter of the APDs there is a device-response function (DRF) the measured g^{(2)} has to be corrected with. By recording the g^{(2)}-function of 100 fs long laser pulses of a 80 MHz Ti:Sapphire the combined DRF of our HBT setup was determined as a gaussian peak function with a half 1/ √ e-width of w = 354 ps. The intensity signal of the APDs can also be used for confocal scans of the diamond sample using a three axis step motor system. Limited by the focus size of the excitation light a point-like emitter appears with a lateral size of ≈ 1.1 μm and an axial size of 3.5 μm in the scans. The complete detection efficiency η of our setup consists of the collection efficiency of the objective, the detection efficiency of the APDs and the transmission of all optical components. Disregarding internal reflections at the sample surface we can estimate η = 2.2 %. The fluorescence can alternatively be guided into a grating spectrometer to analyze the fluorescence spectrum.

3. RESULTS AND DISCUSSION 3.1 Implantation parameters

As there is a current tentativeness on the atomic structure of Ni-related defects^{22, 23} and as there have been recent reports on bright color centers based on Si-Ni-complexes,^{18, 24} we tested co-implantation of different combinations of ions: Together with Ni we implanted Si and/or N. The co-implantation of N shall at first support the creation of NE8 centers,^{14} a second aspect concerns a phenomenon observed for negatively charged SiV-centers: Coimplanted N acts like an electron donor leading to a higher Fermi level in the diamond and higher emission rates of the single centers.^{25}

As mentioned above, we used different implantation energies and doses to find the parameters for the optimum color center density, i. e. a density that is as large as possible but still allows for the localization of single centers. The variation of implantation energy and the associated different implantation depths reflects a trade-off between two different aspects: If, on the one hand, the distance of a single emitter from the diamond surface is larger than half the emission wavelength, refraction at the surface becomes relevant, lowering the collection efficiency. On the other hand, surface effects might act detrimental on color centers if the distance to the surface is too

(a) (b)

Figure 2: (a) Fluorescence spectra of three different single Ni-related color centers. The emission wavelengths are detected between 767 nm and 788 nm and the line-widths amount to 2 nm to 3 nm FWHM. (b) Confocal scan of emitter (3). The size of the emitter in the scan is limited by the objective focus size.

small. In this regard, NV centers were reported to be present in their negatively charged state (i. e. emission at 638 nm) only if they are situated in a depth in the sample larger than 200 nm.^{21}

Photoluminescence investigations of the implanted samples reveal the emergence of a broadband fluorescence background (measured in the interval 765 nm-815 nm) due to radiation damage for too high implantation energies and too high implantation doses. As an example Fig. 1(a) shows this background fluorescence between 765 nm and 775 nm as a function of the focus position for samples implanted with Ni and Si at different energies and an ion dose of 10^{12} cm^{−2}. This dose was found to be the lower limit of ion doses in order to produce a detectable number of color centers. From Fig. 1(a) it is clearly visible that high energy implantation (Ni: ≥ 815 keV, Si: ≥ 600 keV) produces a considerable background fluorescence in the region of the mean implantation depth. This high background in the spectral range of Ni-center emission prohibits the detection of single emitters. For the lower implantation energy shown here there still emerges some background fluorescence but at a level tolerable for single emitter detection. Fig. 1(b) presents measurements of the background fluorescence for a fixed implantation energies (Ni: 86 keV, Si: 86 keV) and different ion doses. These results reveal that also high doses (≥ 10^{13} cm^{−2}) generate unwanted broadband fluorescence. Taking into account these results, we used diamonds implanted with low energy ions (Ni: 86 keV, Si: 56 keV, N: 30 keV) and a dose of 10^{12} cm^{−2} for investigations on single emitters.

3.2 Spectroscopy

In order to investigate the different samples we performed confocal scans, detecting the fluorescence intensity in spectral windows of typical Ni-center emission (765 nm-815 nm). For the samples implanted with Ni only and with Ni and N we could not detect any emission within the detection windows. In samples implanted with Ni and Si, however, it was possible to locate several single color centers even though with a rather low density, i e. approximately one center per 85 μm × 85 μm-scan. Given the implantation dose of 10^{12} cm^{−2} this would correspond to a formation efficiency of 1.4 × 10^{−8}. The color center emission lines are in the spectral range between 770 nm and 786 nm. Emission spectra of three centers are presented in Fig. 2(a).

Fig. 2(b) shows a confocal scan of emitter (3). The size of the emitter in the scan image is limited by the spatial resolution of the confocal microscope. Its fluorescence spectrum (Fig. 3(a)) can be fitted by two Lorentzian peaks at center wavelengths of 770.0 nm and 773.6 nm with line-widths of 1.36 nm and 2.70 nm FWHM. These spectra are similar to those reported for Ni-Si complexes in diamond nano-crystals.^{18, 24} A vibronic sideband could not be observed.

(a) (b)

Figure 3: (a) Emission spectrum of emitter (3) of Fig. 2(b). The spectrum can be fitted with a sum of two Lorentzian peaks, yielding central wavelengths of 770.0 nm and 773.6 nm and line-widths of 1.36 nm and 2.70 nm. A vibronic sideband at larger wavelengths could not be observed. (b) Second-order correlation function single emitter (3). The difference of g^{(2)}_{meas}(0) from zero is due to the timing jitter of the APDs, namely 354 ps. For the fit function a three-level model is used (see text), that is convoluted with the gaussian time response function of the HBT setup. The fit function predicts g^{(2)}_{fit} (0) = 0.31, the deviation from the measured g^{(2)}_{meas}(0) is 0.008.

3.3 Single-photon emission

The sub-Poissonian character of the single emitter’s emission can be demonstrated by recording the second-order correlation function g^{(2)}: In Fig. 3(b) the normalized g^{(2)}-measurement of color center (3) is shown, where the data has been corrected for background events according to the signal-to-noise ratio (SNR) of 6:1, obtained from the confocal scan in Fig. 2(b). During the measurement no blinking or bleaching was observed. The value of g^{(2)}_{meas}(0) is clearly smaller than 0.5, indicating the presence of a single emitter. Nevertheless, the measurement shows photon bunching: For time scales τ > 5 ns, g^{(2)} exceeds the value of one, which can be explained by the existence of a longer lived shelving state (in the equations below signed as state “3”) besides ground (“1”) and excited state (“2”). In the following, this shelving state is supposed to decay into the ground state only and this transition is assumed to be non-radiative. The extent of the bunching is depending on the two inter-system crossing rates for the transitions between excited state and shelving state and between shelving state and ground state. Analogous to the considerations of Kurtsiefer et al.,^{10} an analytical form of the second order correlation function of such a system is given as

g^{(2)}(τ) = 1 − (1 + a) e^{−|τ |/τ1} + a e^{−|τ |/τ2} . (2)

If r_{ij} represents the transition rate from state i to state j, the coefficients are

τ_{1,2} = 2/(A ± √ A^2 − 4B) ,

a =^{1−r31 τ2}

r_{31}(τ_2−τ_1) (3) with the abbreviations A = r_{12} + r_{21} + r_{23} + r_{31} , B = r_{12}r_{23} + r_{12}r_{31} + r_{21}r_{31} . (4) Equation 2 predicts g^{(2)}(0) = 0, which deviates from the measured g^{(2)}meas(0) = 0.30 of Fig. 3(b). The reason is the limited time resolution of the HBT setup due to the timing jitter of the APDs. Thus, the measured g^{(2)}_{meas}(τ)

(a) (b)

Figure 4: (a) Saturation measurement on color center (3). The measured count rate was corrected with the nearly linear background measured 1 μm beside the emitter. The saturation count rate is 77.9 kcount/s, the saturation intensity was determined to be 365 kW/cm^2. (b) Intensity as function of the polarization angle of the excitation light. An angle of 0^∘ corresponds to the ⟨001⟩ crystal directions.

of Fig. 3(b) has to be fitted with a convolution of the ideal g^{(2)}(τ) (Eqn. 2) with the device-response function:

g^{(2)}_{f it}(τ) = 1 √ 2πw ∞� −∞ g^{(2)}(τ^′) · e^{−(τ −τ ′)2/2w2} dτ^′ . (5)

Fitting Eqn. 5 to the data yields constants of τ_1 = 0.83 ns, τ_2 = 42.2 ns and a = 0.16. The deviation of g^{(2)}_{fit} (0) = 0.31 predicted by the fit function and the measured value is 0.008. This small deviation proves that the difference of the measured g^{(2)}meas(0) from zero is solely due to the limited timing resolution of our photon counting setup and the emitter shows perfect anti-bunching.

We also performed a saturation measurement by increasing the excitation power and recording the total count rate of the color center with the HBT setup. The background emission was measured at a spot 1 μm beside the color center and subtracted from the signal. The result is displayed in Fig. 4(a). A fit for the count rate R of the form R = R_∞ P P + P_{sat} (6) to the data of Fig. 4(a) yields a saturation power P_{sat} of 1.17 mW and a saturation count rate R_∞ of 77.8 kcount/s. This value is of the same magnitude as reported for NE8 centers^{26} but about 50 % lower than the 200 kcounts/s reported for Ni/Si-centers in nano-diamonds.^{18} With a half 1/ √ e focus width of 223 nm, also estimated from Fig.

2(b) one yields a saturation intensity of 365 kW/cm^2. For a rough estimate of the radiative excited state lifetime τ_f of the emitter we assume a two-level system. τ_f can than be calculated from τ_1 by applying a correction factor taking into account the excitation power (the g^{(2)} of Fig. 3(b) was recorded at 390 μW) and the saturation power (1.17 mW, see above):^{27}

τ_f = τ_1 · � 1 + P P_{sat} � = 0.83 ns · 1.33 = 1.11 ns . (7)

This value is comparable to the lifetime of 2 ns determined for Ni-related centers.^{17, 18} To measure the radiative excited state lifetime with higher precision one has to determine all four transition rates of equation 2 with the help of an excited state lifetime measurement or with excitation power dependent g^{(2)} measurements. This work is in progress.

To gain insight into the emitter’s orientation in the diamond crystal, the dependency of the count rate on the polarization angle of the excitation light was measured (Fig. 4(b)). It can be well described by a sinusoidal variation. From the positions of the intensity maxima and the known orientation of the fcc diamond lattice in our setup, one can deduce the alignment of a dipole or at least its projection to the ⟨001⟩ direction. However, the visibility of the polarization-dependent excitation, V = I_{max} − I_{min} I_{max} + I_{min}

, (8)

amounts to 65 % only. The fact that this value is smaller than 100 % might be attributed to the presence of a second dipole at an orthogonal direction. A similar behavior is known from the NV center for which electric dipole transitions are allowed for dipoles in a plane perpendicular to the NV symmetry axis^{28} or for the 1.40 eV Ni-related center where a differently polarized zero-phonon-line doublet arises due to two possible dipole orientations in the diamond lattice.^{29} Further investigations are required to explore the dipole structure of the Ni-Si complexes in more detail.

Finally, we want to discuss the atomic composition of the presented color centers. The spectral range of the emission wavelengths of our color centers partly overlaps with the range from 782 nm to 801 nm reported for NE8 centers.^{15–17, 26} However, the samples that have been co-implanted with Ni and N do not show emission of color centers, whereas the centers presented here have been detected after co-implantation of Ni and Si. We therefore suppose that the presented centers are complexes containing Ni and Si. As far as the involvement of N is concerned, no definite statement is possible because of the N fraction present before implantation. We hope to answer this question with implantations in diamond containing less N.

3.4 Conclusion

We report observation of the first single Ni-related color centers in single crystalline diamond produced via ion implantation, which is an important step towards their deterministic production. With an implantation depth of ≈ 40 nm they are close to the surface and exhibit emission lines between 770 nm and 786 nm with line-widths of about 3 nm FWHM. A measured g^{(2)}(0) of 0.31 can completely be explained with the timing resolution of the HBT setup and the very short lifetime of the excited state and unambiguously proves single-photon emission. The saturation count rate was determined as 77 kcounts/s. Polarization measurements indicate that two orthogonal dipoles contribute to the fluorescence. Different combinations of implantated ions lead to the conclusion of Si being constituent of the centers. With further variation of implantation parameters and co-dopants we aim at enhancing the creation efficiency and having more detailed information about the atomic structure.

4. ACKNOWLEDGEMENTS The ion implantations were performed with Prof. Dr. Wolfgang Bolse (Universität Stuttgart, Germany) at the Universität Göttingen, Germany and with PD Dr. Jan Meijer and Dr. Detlef Rogalla at the RUBION (Ruhr- Universität Bochum, Germany). The project was financially supported by the Deutsche Forschungsgemeinschaft and the Bundesministerium für Bildung und Forschung (EphQuaM network, contract 01BL0903).

REFERENCES [1] Bennett, C. H. and Brassard, G., “Quantum cryptography: Public key distribution and coin tossing,” Proc.

IEEE Int. Conf. on Computers, Systems & Signal Processing (Bangalore, India), 175 (1984). [2] Keller, M., Lange, B., Hayasaka, K., Lange, W. and Walther, H., “Continuous generation of single photons with controlled waveform in an ion-trap cavity system,” Nature 431, 1075 (2004).

[3] Kuhn, A., Hennrich, M. and Rempe, G., “Deterministic single-photon source for distributed quantum networking,” Phys. Rev. Lett. 89, 067901 (2002).

[4] Brunel, C., Lounis, B., Tamarat, P. and Orrit, M., “Triggered source of single photons based on controlled single molecule fluorescence,” Phys. Rev. Lett. 83, 2722 (1999).

[5] Santori, C., Pelton, M., Solomon, G., Dale, Y. and Yamamoto, Y., “Triggered single photons from a quantum dot,” Phys. Rev. Lett. 86, 1502 (2001).

[6] Högele, A., Galland, C., Winger, M. and Imamoğlu, A., “Photon antibunching in the photoluminescence spectra of a single carbon nanotube,” Phys. Rev. Lett. 100, 217401 (2008).

[7] Zaitsev, A. M., [Optical Properties of Diamond], Springer, Berlin (2001).

[8] Burns, R. C., Chumakov, A. I. Connell, S. H., Dube, D., Godfried, H., Hansen, J. O., Härtwig, J., Hoszowska, J., Masiello, F., Mkhonza, L., Rebak, M., Rommevaux, A., Setshedi, R. and Van Vaerenbergh, P., “HPHT growth and x-ray characterization of high-quality type IIa diamond,”J. Phys.: Condens. Matter 21, 364224 (2009).

[9] Lounis, B. and Orrit, M., “Single-photon sources,”Rep. Prog. Phys. 68, 1129 (2005). [10] Kurtsiefer, C., Mayer, S., Zarda, P. and Weinfurter, H., “Stable solid-state source of single photons,” Phys.

Rev. Lett. 85, 290 (2000).

[11] Jelezko, F., Gaebel, T., Popa, I., Domhan, M., Gruber, A. and Wrachtrup, J., “Observation of coherent oscillation of a single nuclear spin and realization of a two-qubit conditional quantum gate,” Phys. Rev. Lett. 93, 130501 (2004).

[12] Neumann, P., Mizuochi, N., Rempp, F., Hemmer, P., Watanabe, H., Yamasaki, S., Jacques, V., Gaebel, T., Jelezko, F. and Wrachtrup, J., “Multipartite entanglement among single spins in diamond,”Science 320, 1326 (2008).

[13] Wang, C., Kurtsiefer, C., Weinfurter, H. and Burchard, B., “Single photon emission from SiV centres in diamond produced by ion implantation,” J. Phys. B 39, 37 (2006).

[14] Nadolinny, V. A., Yelisseyev, A. P., Baker, J. M., Newton, M. E., Twitchen, D. J., Lawson, S. C., Yuryeva, O. P. and Feigelson, B. N., “A study of^{13}C hyperfine structure in the EPR of nickel-nitrogen-containing centres in diamond and correlation with their optical properties,”J. Phys.: Condens. Matter 11, 7357 (1999).

[15] Gaebel, T., Popa, I., Gruber, A., Domhan, M., Jelezko, F. and Wrachtrup, J., “Stable single-photon source in the near infrared,” New. J. Phys. 6, 98 (2004).

[16] Rabeau, J. R., Chin, Y. L., Prawer, S., Jelezko, F., Gaebel, T. and Wrachtrup, J., “Fabrication of single nickel-nitrogen defects in diamond by chemical vapor deposition,” Appl. Phys. Lett. 86, 131926 (2005).

[17] Wu, E., Rabeau, J. R., Roger, G., Treussart, F., Zeng, H., Grangier, P., Prawer, S. and Roch, J.-F., “Room temperature triggered single-photon source in the near infrared,”New. J. Phys. 9, 434 (2007).

[18] Aharonovich, I., Zhou, C., Stacey, A., Orwa, J., Castelleta, S., Simpson, D., Greentree, A. D., Treussart, F., Roch, J.-F. and Prawer, S., “Enhanced single-photon emission in the near infrared from a diamond color center,” Phys. Rev. B 79, 235316 (2009).

[19] Kreuzer, C., Riedrich-Möller, J., Neu, E. and Becher, C., “Design of photonic crystal microcavities in diamond films,”Opt. Express 16, 1632 (2008).

[20] Brouri, R., Beveratos, A., Poizat, J.-P. and Grangier, P., “Photon antibunching in the fluorescence of individual color centers in diamond,” Opt. Lett. 25, 1294 (2000).

[21] Santori, C., Barclay, P. E., Fu, K.-M. C. and Beausoleil, R. G., “Vertical distribution of nitrogen-vacancy centers in diamond formed by ion implantation and annealing,”Phys. Rev. B 79, 125313 (2009).

[22] Iakoubovskii, K. and Adriaenssens, G. J., “Optical characterization of natural argyle diamonds,” Diamond Relat. Mater. 11, 125 (2002).

[23] Yelisseyev, A., Lawson, S., Sildos, I., Osvet, A., Nadolinny, V., Feigelson, B., Baker, J. M., Newton, M.

and Yuryeva, O., “Effect of HPHT annealing on the photoluminescence of synthetic diamonds grown in the Fe-Ni-C system,” Diamond Relat. Mater. 12, 2147 (2003).

[24] Aharonovich, I., Zhou, C., Stacey, A., Treussart, F., Roch, J.-F. and Prawer, S., “Formation of color centers in nanodiamonds by plasma assisted diffusion of impurities from the growth substrate,”Appl. Phys. Lett. 93, 243112 (2008).

[25] Wang, C., “A solid-state single photon source based on color centers in diamond,” PhD thesis, Ludwig- Maximilians-Universität München (2007).

[26] Wu, E., Jacques, V., Zeng, H., Grangier, P., Treussart, F. and Roch, J.-F., “Narrow-band single-photon emission in the near infrared for quantum key distribution,” Opt. Express 14, 1296 (2006).

[27] Trebbia, J.-B., Ruf, H., Tamarat, P. and Lounis, B., “Efficient generation of near infra-red single photons from the zero-phonon line of a single molecule,” Opt. Express 17, 23986 (2009).

[28] Davies, G. and Hamer, M. F., “Optical studies of the 1.945 ev vibronic band in diamond,” Proc. R. Soc.

A 348, 285 (1976).

[29] Collins, A. T., “The polarised adsorption and cathodoluminescence associated with the 1.40 ev centre in synthetic diamond,”J. Phys.: Condens. Matter 1, 439 (1989).