arXiv:1004.2842v1 [astro-ph.SR] 16 Apr 2010

Discovery of the 2010 Eruption and the Pre-Eruption Light Curve for Recurrent Nova U Scorpii

Bradley E. Schaefer, Ashley Pagnotta, Limin Xiao Physics and Astronomy, Louisiana State University, Baton Rouge, LA 70803

Matthew J. Darnley, Michael F. Bode Astrophysics Research Institute, Liverpool John Moores University, Birkenhead, CH41 1LD, UK

Barbara G. Harris, Shawn Dvorak, John Menke, Michael Linnolt, Matthew Templeton, Arne A. Henden American Association of Variable Star Observers, 49 Bay State Road, Cambridge MA 02138

Grzegorz Pojmański, Bogumił Pilecki Warsaw University Observatory, Al. Ujazdowskie 4, 00-478 Warszawa, Poland

Dorota M. Szczygiel, Department of Astronomy, The Ohio State University, 140 W. 18th Ave., Columbus OH 43210

Yasunori Watanabe Variable Star Observers League of Japan, Keiichi Saijo National Science Museum, Ueno-Park, Tokyo Japan

ABSTRACT

We report the discovery by B. G. Harris and S. Dvorak on JD 2455224.9385 (2010 Jan 28.4385 UT) of the predicted eruption of the recurrent nova U Scorpii (U Sco). We also report on 815 magnitudes (and 16 useful limits) on the preeruption light curve in the UBVRI and Sloan r’ and i’ bands from 2000.4 up to 9 hours before the peak of the January 2010 eruption. We found no significant long-term variations, though we did find frequent fast variations (flickering) with amplitudes up to 0.4 mag. We show that U Sco did not have any rises or dips with amplitude greater than 0.2 mag on timescales from one day to one year before the eruption. We find that the peak of this eruption occurred at JD 2455224.69±0.07 and the start of the rise was at JD 2455224.32±0.12. From

– 2 –

our analysis of the average B-band flux between eruptions, we find that the total mass accreted between eruptions is consistent with being a constant, in agreement with a strong prediction of nova trigger theory. The date of the next eruption can be anticipated with an accuracy of ±5 months by following the average B-band magnitudes for the next ∼10 years, although at this time we can only predict that the next eruption will be in the year 2020±2.

Subject headings: novae, cataclysmic variables

1. Introduction

Recurrent novae (RNe) are ordinary novae (binary systems with mass accreting onto a white dwarf until thermonuclear runaway is triggered) for which the recurrence time scale is between a decade and a century, such that more than one eruption has been observed (Payne- Gaposchkin 1964; Bode & Evans 2008; Evans et al. 2008). To have the fast recurrence time scale, the novae must have the white dwarf near the Chandrasekhar mass and have a high accretion rate. These properties, at face value, imply that the white dwarf will soon exceed the Chandrasekhar mass and become a Type Ia supernova, and thus RNe are one of the premier candidates for the progenitor class of these supernovae. RNe typically have relatively fast eruptions, high ejection velocities, and small eruption amplitudes when compared to ordinary novae. Only ten RNe are known with certainty in our Milky Way (Schaefer 2010).

U Scorpii (U Sco) previously erupted in March 1999 with a peak at V=7.5 mag (Schaefer 2010). In quiescence, it has V≈17.6 and has deep total eclipses taking it down to V=18.9 mag (Schaefer 2010) with an orbital period of 1.23 days (Schaefer 1990; Schaefer & Ringwald 1995). U Sco is the fastest of all known novae, fading by three magnitudes from peak in just 2.6 days, while its rise from minimum to peak is 6-12 hours (Schaefer 2010). No light echo was detected to deep limits after the 1987 eruption (Schaefer 1988).

U Sco has now had ten known eruptions, in the years 1863, 1906, 1917, 1936, 1945, 1969, 1979, 1987, 1999 (Schaefer 2010), and now 2010 as we report in this paper. With the discovery of the 1917, 1945, and 1969 eruptions (Schaefer 2001; 2004), it has become apparent that U Sco has outbursts at intervals of 10 ± 2 years since 1900. The exceptions to this are the two intervals of 19 and 24 years, which are easily interpreted as being double intervals, with eruptions around 1927 and 1957 having been missed. (U Sco is 3.6^∘ from the Sun every 28 November, so a significant fraction of its very fast eruptions must be missed.) With this, it became apparent that the next eruption of U Sco should occur in the year

– 3 –

2009 ± 2. Schaefer (2005) made a better prediction, on the physical basis that the time between eruptions scales as the inverse of the average mass accretion rate between eruptions (as measured from the B-band flux), with the scaling determined by the inter-eruption light curves from prior eruptions. The predicted eruption date was 2009.3 ± 1.0. This is the first time that a specific star has been predicted to have an eruption on a specific date.

With this advance notice, a large international collaboration was formed to provide detailed photometry and spectroscopy in the X-ray, ultraviolet, optical, and infrared bands. With U Sco going from quiescence to peak to one magnitude below peak in 24 hours, we realized that we must have frequent monitoring of U Sco to get a fast alert of an eruption. To this end, we mobilized daily and hourly photometry with the SMARTS 1.3-m telescope in Chile, the fully-robotic 2.0-m Liverpool telescope (Steele et al. 2004) in the Canary Islands, and the four ROTSE 0.45-m telescopes in Australia, Texas, Namibia, and Turkey. In addition, we mobilized a large number of observers through the American Association of Variable Star Observers (AAVSO). For the seven months each year centered on the opposition of U Sco, we got hourly data. The headquarters of the AAVSO served as the international clearinghouse for discovery reports and delivery of alerts to the world. In addition, U Sco was heavily monitored from 2001 to 2009 with long time series photometry, where the main goal was to precisely measure the timing of the eclipses. The result of all this activity from 2000-2010 is the all-time best pre-eruption light curve for any nova. This paper presents all the magnitudes and an analysis of this large data set.

2. The Observations

Since 1987, one of us (BES) has heavily monitored U Sco, with emphasis on the light curve around the time of the eclipses (Schaefer 1990; 2005; 2010; Schaefer & Ringwald 1995). These observations have been made with the McDonald 2.7-m, 2.1-m, and 0.8-m telescopes in Texas as well as with the 1.3-m, 1.0-m, and 0.9-m telescopes on Cerro Tololo in Chile. The typical integration times were 300 seconds in the B-band and I-band and 100 seconds in the V-band. Normal processing was carried out, and the photometry was done using the IRAF package PHOT, which performs aperture photometry on the stars in this uncrowded field. The magnitude of U Sco was determined relative to a selection of nearby comparison stars, for which the primary comparison star, named ‘COMP’ (J2000 16:22:25.6 -17:51:34), has B=16.96, V=15.87, R=15.25, and I=14.59 (Schaefer 2010). The photon statistics, as calculated by PHOT, are generally smaller than 0.01 mag, but the systematic uncertainties, as represented by the scatter in the measures of standard star magnitudes (Landolt 1992; 2009), are typically 0.015 mag. The quoted uncertainty is the addition in quadrature of

– 4 –

0.015 mag and the uncertainty from photon statistics. This data set consists of over 2100 magnitudes, mostly as fast time series photometry centered on times of eclipses. The specific analysis of the eclipse shapes has already been presented in Schaefer (2010), while a specific analysis of the eclipse times is reserved for a separate paper. For the study in this paper, the eclipse effects would only hide the other variability, so we have not included any magnitudes with orbital phase between -0.10 and +0.10. In all, we have 162 magnitudes in the U, B, V, R, and I filters from 2001 to 2006.

Starting in early 2008, we (BES, AP, and LX) began frequent regular monitoring of U Sco with the 1.3-m SMARTS telescope on Cerro Tololo. This telescope is queue-scheduled, so an operator takes images of U Sco for us several times a week, thus allowing long-term frequent monitoring without requiring us to be at the telescope year-round. Most of the observations were 300 second exposures in the B-band, but we also made several sets of nearly simultaneous BVRI images. The procedures and analysis were identical to those described in the previous paragraph. In all, we have 145 magnitudes from early 2008 until late 2009.

Beginning in early 2008, one of us (BES) started using the robotic ROTSE telescopes to monitor U Sco once every hour. The ROTSE telescopes (Akerlof et al. 2003) are four automated 0.45-m f/1.9 telescopes with 1.85^∘ fields designed to provide very fast response to satellite triggers on Gamma-Ray Bursts. The four telescopes are located at Coonabarabran, Australia; Mount Gamsberg, Namibia; Bakirlitepe, Turkey; and McDonald Observatory, Texas. This wide coverage in longitude gives the potential for complete time coverage. No filters were used, so the resultant magnitudes are similar to a very broad R-band. The exposure time was 60 seconds in all cases. The requested cadence was one exposure every hour from every ROTSE telescope, but problems such as clouds, dawn, daylight, a nearby Full Moon, an altitude lower than 20^∘, higher priority alerts for Gamma-Ray Bursts, and the usual equipment problems all make for a substantially lower cadence. In the months around opposition, the ROTSE system achieved the ideal of nearly hourly coverage for around a quarter of the days, while the average coverage was roughly 15 images in every 24 hour interval. In the months approaching the conjunction of U Sco with the Sun, the daily coverage decreased to one or two images per 24 hour interval. For example, in 2009, ROTSE first recorded that U Sco was not in eruption on 9 January (43 days after conjunction) and last imaged U Sco on 18 October (40 days before conjunction). The limiting magnitude varied widely (with clouds, altitude, focus, and the Moon), yet U Sco was visible at low significance on about half the images. Even on the best images, U Sco did not get better than a 5-sigma detection, so in no case do we have accurate photometry from ROTSE. In all, we have a set of roughly 7000 useable U Sco images from ROTSE. One of the goals of the hourly monitoring by ROTSE was so that we (BES, AP, and MT) could frequently check

– 5 –

the images to try to discover the eruption as soon as possible. Another goal was to catch any pre-eruption rise (see Section 4) even if the amplitude was small and the duration was short. For the eruption in January 2010, there was no significant pre-eruption rise and our (BGH, SD, JM, ML) small-telescope monitoring produced a better light curve than ROTSE. A third reason for the ROTSE program was the hope that we would catch U Sco on the rise. In all previous eruptions, U Sco has been recorded on the rise only three times, each being close to the peak, with the rise from quiescence apparently lasting 6-12 hours (Schaefer 2010). In the hours before the discovery of the 2010 eruption, the Namibia ROTSE telescope did not look at U Sco due to a higher priority follow-up to a Gamma-Ray Burst, the Turkey ROTSE had clouds, and the Australia ROTSE was down with equipment problems. With the chance lack of any data on the rise and the poor photometric accuracy of the two years of monitoring, we are not presenting any of the ROTSE magnitudes in this paper.

Beginning in early 2008, we (MT and AAH) organized a steady watch on U Sco by the many observers of the AAVSO. The primary goal was to catch U Sco’s eruption as quickly as possible. The widespread distribution in longitude of the many AAVSO observers makes for frequent monitoring, and this was the best chance of catching the eruption early. For the half year around opposition, U Sco was checked for outburst up to 6.7 times per day for monthly averages. A further requirement for getting fast reactions from the world’s telescopes was that the discovery had to be communicated from the discoverer to the rest of the world. For this vital need, the AAVSO Headquarters served as an around-the-clock, every-day-of-the-year communication center. Observers were instructed to report their discovery electronically, then automated services would alert key individuals who would test for validity and solicit fast confirmation. Once the eruption was discovered, we would immediately start notifying the world through IAU Circulars and long-prepared phone and email lists.

As part of this effort, many AAVSO members made positive measures of the brightness of U Sco during the pre-eruption phase. The AAVSO database contains 412 magnitudes (from 29 observers) and 2853 limits (from 102 observers) between the end of the 1999 eruption and the start of the 2010 eruption (JD 2451557.148 to 2455224.127). The limits were vital at the time of the observation for knowing that U Sco had not erupted, but they are not now helpful for following the accretion rate. A further 77 magnitudes are not used here, primarily because the photometric system is not standard and the meaning of the magnitude would be unclear. This leaves us with 335 positive detections in the pre-eruption time interval. Just over 90% of these magnitudes were made with unfiltered CCD imaging, where the magnitudes were calibrated differentially from nearby comparison stars using either the Vband or R-band magnitudes. These magnitudes (designated CV or CR) will not be exactly on either the V or R magnitude systems, but the expected deviations (less than 0.1 mag) are always small compared to normal variations of U Sco. Our instrumentation is a 16-inch

– 6 –

f/10 Schmidt-Cassegrain with a V filter located in New Smyrna Beach, Florida (BGH), an 18-inch Newtonian telescope without filter located in Barnesville, Maryland (JM), and a 10- inch Schmidt-Cassegrain telescope with a V filter located in Clermont, Florida (SD). During the critical month before the eruption, all positive detections in the AAVSO database are provided by us (BGH and JM) from CCD images.

Beginning in early 2009, we (MJD and MFB) started monitoring U Sco with the robotic 2.0-m Liverpool Telescope (Steele et al. 2004) at the Observatorio del Roque de Los Muchachos on La Palma in the Canary Islands. The goals were to define the pre-eruption light curve in many bandpasses and perhaps to catch a pre-eruption rise or the eruption rise itself. The photometry was all differential with respect to the comparison stars given in Schaefer (2010). The images were usually taken through many filters in quick succession once each night. The filters we used were the B, V, Sloan r’, and Sloan i’. Each light curve point consisted of three 60 s exposures. The data were analysed using Starlink software. The typical photometric errors had an uncertainty of 0.01-0.02 mag. In all, we present here 173 magnitudes from the Liverpool Telescope.

An important practical question was whether U Sco erupted during its yearly conjunction with the Sun every 28 November. The worst case scenario would be for U Sco to go up in early November, fade back to its quiescent level before any detection was made, and for the eruption to be completely missed. If U Sco went up while behind the Sun, it would be vital to know this so that our community would not be waiting anxiously with many resources, and also so that observations in the late tail could still be performed. For this, deep images would have to be made as far into twilight as possible. Professional telescopes do not go low enough in the sky, so the push into twilight was made entirely by AAVSO observers. For the November 2008 solar conjunction, U Sco was lost on 2 November and deep images showed U Sco to be near quiescence (V>16.1) on 3 January, for a solar gap of 62 days. For the November 2009 solar conjunction, U Sco was last detected at V=18.6 on 21 October (JM), was fainter than 12.0 mag on 4 November (ML), last checked on 6 November, while after conjunction our images showed it to be fainter than V=14.0 on 27 December (ML), fainter than V=14.3 on 28 December (ML), fainter than V=17.4 on 30 December (BGH), and at quiescence (V=17.6) on 4 January (BGH), for a solar gap of 51-59 days. From the V-band light curve template (Schaefer 2010; Schaefer et al. 2010b), U Sco is at V=16.6 ∼42 days after the peak. With this extremely short duration, the possibility for a missed eruption was for a peak from 3-23 November 2008 or 7-16 November 2009. As a chance to discover a U Sco eruption in the week around solar conjunction, one of us (SD) used the SOHO LASCO C3 instrument (which hides the Sun behind a white light coronagraph and produces images of stars, comets, and the corona out to 32 solar radii from the Sun) to demonstrate that the nova never came to peak (i.e., V>8.6 mag) during that week-long interval.

– 7 –

The last positive detection of U Sco before its eruption was by us (BGH) on JD 2455223.9473. Nevertheless, there were later useful upper limits. Observing from the island of Hawaii, we (ML) used a 20-inch f/3.6 reflector to place a visual limit of >16.5 mag on JD 2455224.1271. The ASAS-3N telescope took a V-band image with a 180 second exposure on JD 2455224.1649 and we (GP, DMS, and BP) did not detect any source to a limit of 15.0 mag. This robotic telescope is located in Maui on Hawaii at an elevation of 3056 m, with a f/2.0 lens with focal length of 200 mm for a field of view of 8.5^∘ on a side on a 2048x2048 pixel CCD chip. The last known observation before discovery (with V>9.2) was taken by us (YW) on JD 2455224.3438 with a 60-mm f/5.9 refractor with an unfiltered CCD located in Yokosuka Japan.

From these sources, we have collected 815 magnitudes for U Sco between the end of the 1999 eruption and the discovery of the 2010 eruption. (We also report on 16 useful limits and the first three eruption magnitudes.) These are presented in Table 1. The first column lists the heliocentric Julian Date (HJD) of the observation. The second column gives the band of the observation. The third column gives the magnitude and the one-sigma uncertainty. The fourth column gives the source of the magnitude, either by identifying the telescope or by giving the AAVSO or VSOLJ observer identification code. HBB is for B. G. Harris, DKS is for S. Dvorak, MJLE is for J. Menke, LMK is for M. Linnolt, SCK is for B. E. Schaefer, and Wny is for Y. Watanabe. The next column is the orbital phase of U Sco (with primary eclipses at phase 0.0 and 1.0 and secondary eclipses at phase 0.5) for the pre-eruption ephemeris of HJD = 2451234.539 + N × 1.2305470. The last column gives the fractional year corresponding to the Julian Date of the observation. Figure 1 displays the full light curve for the B filter, while Figure 2 shows the V band light curve after the start of 2009. Figure 3 shows the folded light curves for the B and V bands.

Table 2 lists various characteristic quantities (magnitudes, colors, and fluxes), their averages, their RMS scatters, and the number of observations going into the averages. For the science of this paper, we are only interested in the non-eclipsing behavior, so to be conservative, we have included only measures more than 0.10 in phase (0.123 in days) away from the central eclipse times (i.e., between phases 0.10 and 0.90). For the colors, we have included only those colors derived from two magnitudes taken within 0.005 days of each other so as to keep the errors introduced by fast variations to a minimum. The overall magnitudes (for all bands) and colors for the entire time interval (from 2000 to the 2010 eruption) are recorded. We also break up the B and V band magnitudes into smaller intervals so as to seek significant variations. Finally, we include the average B-band fluxes as defined in Section 6.

– 8 –

3. Discovery of the 2010 Eruption

The 2010 Eruption was discovered by us (BGH and SD) as part of systematic nightly monitoring aimed specifically at the discovery of the eruption. Harris imaged U Sco at 2010 Jan 28.4385 UT (JD 2455224.9385), saw the bright star in the center of the field, and quickly realized that U Sco was in eruption. Her first act was to send the observation to the AAVSO, and then she telephoned Schaefer. Schaefer could not get confirmation from ROTSE, so he took his 6-inch telescope out into the front yard and made direct visual confirmation that U Sco was bright in eruption. Independently, Dvorak discovered the eruption, notified the AAVSO, and started a time series on U Sco to cover the short time interval until dawn got too bright to continue. These initial observations are included in Table 1. Circumstances, pictures, and anecdotes on the two independent discoveries are given in Simonsen & MacRobert (2010).

In practice, our organization worked perfectly. The AAVSO automated alert system woke up MT and AP. Within an hour of the discovery, the eruption had been confirmed and worldwide notifications were started. The first was to the IAU Circulars (Schaefer et al. 2010a). The sun had already risen in Chile, so we started with more western observatories as well as spacecraft. Within two hours, BES, AP, and MT had worked through all the longprepared contact lists. The response to these contacts (both by members of our existing collaboration as well as by independent observers) was excellent and fast.

The discovery of the 2010 eruption was a fulfillment of the prediction in Schaefer (2005) that U Sco would next erupt in the year 2009.3±1.0. The eruption in 2010.1 falls well within the one-sigma region of the prediction. This adds good confidence to the physical method of summing the total accreted material based on the B-band flux in the prior inter-eruption interval.

4. Variations in the Light Curve

The folded light curve (see Figure 3) shows the primary eclipse at phases 0.0, 1.0, and 2.0. (The magnitudes are double plotted so as to make the eclipse at phase 1.0 easily visible.) The out-of-eclipse brightness varies substantially, and this makes for a ragged eclipse light curve because each point is from a different epoch eclipse with a different amount of flickering light added. The scatter around the middle of the eclipse is much smaller than the out-of-eclipse scatter, which implies that the flickering region is small and centrally located.

No secondary eclipse is visible in the B and V bands. However, in the I-band, the secondary eclipse is visible with amplitude roughly 0.3 mag. This is readily understood as

– 9 –

the companion star is much cooler than the accretion disk so eclipses of the companion can only become noticeable at longer wavelength.

All cataclysmic variables, including novae and recurrent novae, show fast flickering. U Sco is no exception, and this flickering causes the substantial scatter in Figures 1 and 2. To quantify this, we have calculated the magnitude difference between pairs of magnitudes in the same band, with the pairs being separated in time by some range of delays. When the delays are shorter than one hour, the RMS scatter of the magnitude differences is 0.06 mag, which is consistent with the expected scatter as based only on the quoted error bars. When the delays are longer than one day, the RMS scatter of the magnitude differences is 0.27, which corresponds to no correlation between the flickers. The RMS scatters are 0.09, 0.13, 0.18, 0.19, and 0.21 mag for delays of 0.05-0.10, 0.10-0.15, 0.15-0.20, 0.20-0.50, and 0.50-1.00 days, respectively. With this, the timescale for correlated variations is from one hour to one day. The amplitude of these variations is given by the maximum values of the magnitude differences, which is roughly 0.4 mag for all delays longer than 0.05 days. Our observations are not sensitive to fast, small-amplitude variations.

Many of the recurrent novae have large secular variations in their quiescent light curves (Schaefer 2010). However, U Sco does not appear to have any long-term variations, as can be seen in Figure 1. To quantify this for the B and V light curves, Table 2 gives the averages for various time intervals. Again, no significant variations on time scales of one year or longer are found, despite having small error bars due to the many magnitudes included in the averages. On the timescale of a tenth of a year, there is marginal evidence for variations, with the V-band average for 2009.7-2009.9 being 0.27 ± 0.05 fainter than average, but this variation is not reflected in other bands, so we think that this apparent change is not significant. In all, we see no evidence for variations on timescales from 0.1 to 10 years.

On longer times scales, U Sco has small, marginally-significant variations. During the last four inter-eruption intervals, the average B magnitude was 18.44±0.07, 18.30±0.05, and 18.52±0.04, and 18.45±0.02 for 1969-1979, 1979-1987, 1987-1999 (Schaefer 2005), and 1999-2010 respectively. The chi-square for the observed averages (on the hypothesis that the average is a constant) is 12.1 for three degrees of freedom. The best argument for the significance of these variations is that the deviations from the average are correlated with the duration of each inter-eruption time interval as predicted by theory (see Section 7).

The earliest recorded image of U Sco in quiescence is from the original Palomar Sky Survey. We measure B=18.80±0.15 and R=18.00±0.18 for 29 June 1954. This is substantially fainter than is normal for later decades, and the time is far from any plausible eclipse.

– 10 –

5. No Pre-eruption Rise or Dip

Robinson (1975) examined all known pre-eruption light curves of novae as based on reports in the literature. He found that five out of eleven novae have pre-eruption rises, lasting months to years in advance of the eruption, with amplitudes from 0.15 to 1.5 mag. Collazzi et al. (2009) have gone to the original archival photographic plates to measure many pre-eruption light curves, including the key novae with claimed pre-eruption rises. Four of the five claimed pre-eruption rises were found not to exist as based on our examination of the original plates, such that the claimed rises were caused by simple errors in the literature. Nevertheless, one of the rises (for V533 Her) was confirmed and extended, with the rise being an exponential increase over ∼1.5 years and a brightening by up to 1.5 mag. Also, an additional pre-eruption rise was confirmed in V1500 Cyg, which brightened from roughly 21.5 mag to roughly 13 mag in the month preceding the eruption. (V1500 Cyg had the fastest known classical nova eruption, and was second only to U Sco itself amongst all novae.) In addition, a complex pre-eruption dip was confirmed for the recurrent nova T CrB in the year before the eruption, with the dip being 1-2 mag deep. In all, three out of 22 novae had either pre-eruption rises or pre-eruption dips.

With other recurrent novae and the fastest classical nova having anticipatory rises and dips, we should investigate whether U Sco has any similar changes. (We were also hopeful that any such phenomenon would allow us to anticipate the next eruption.) For this, we can use our light curves to seek any rises or dips. A glance at Figure 1 quickly shows that there is no significant rise or dip. Quantitatively, Table 2 shows that the B and V magnitudes from 2010.0-2010.1 are not significantly high or low. And looking at the bottom of Table 1, we see that the last positive detection of U Sco has V=18.2 (BGH) just 24 hours before the discovery. With this, we can put strong limits on the presence of any pre-eruption rise or dip to be less than roughly 0.2 mag in amplitude on time scales from one day up to a year.

6. The Rise to Peak

U Sco rises from quiescence to peak in roughly 6-12 hours, although this is based on just three pre-peak positive detections and one limit (Schaefer 2010). For the 1936 eruption, a single Harvard plate shows B=10.75 at a time 0.25 days before peak. For the 1987 eruption, Dr. N. W. Taylor measured V=14.0 in the day before the peak. For the 1999 eruption, P. Schmeer measured V=9.5 at a time 0.31 days before the peak. The final rise to maximum is at a rate of around 19 magnitudes per day, which would imply a rise time of roughly 12 hours if the rise is uniform throughout. For the 1999 eruption, B. Monard set a limit that V > 14.3 at a time 0.46 days before the peak.

– 11 –

We can use our data to obtain the best estimate for the time of peak in the 2010 eruption. The discovery image was taken at JD 2455224.9385 (BGH), and we have measured the magnitude of U Sco (with respect to the comparison star sequence in Schaefer 2010) to be V=7.85 with the systematic uncertainties dominating at around 0.10 mag. The observed initial rate of decline is 1.4 mag per day (Schaefer et al. 2010b). The peak magnitude of U Sco is V=7.5, primarily as based on the observed peak of the 1999 eruption (Schaefer 2010). In an exhaustive comparison of all RN eruptions and those from U Sco in particular, Schaefer (2010) found that all RN are consistent with having the identical eruption light curve shapes, and this is our basis for taking the peak from the 1999 U Sco eruption as being the same for the 2010 eruption. With this, the peak of the 2010 eruption would have been 0.25 days before discovery, which gives a peak at JD 2455224.69 with a likely uncertainty of 0.07 days.

The observational limits from the 2010 eruption show that the eruption could not have started much before the ASAS-3N image at JD 2455224.1649. From the limits on the prior eruptions, the eruption started 0.25 to 0.5 days before the peak, which is roughly from JD 2455224.19 to 2455224.44. Thus, the time of the start of the expansion, as required by the ‘universal decline law’ of Hachisu & Kato (2006), can be expressed as JD 2455224.32±0.12.

Disappointingly, we have no observations from JD 2455224.3438 to 2455224.9385 and thus have completely missed the entire rise and the hour of peak. In January, U Sco is fairly close to the Sun and hence only visible from a narrow slice of longitude at any given time. In the southern hemisphere, the start of the rise would only have been visible from the longitudes in the Indian Ocean, while the peak would only have been visible from the longitudes in the South Atlantic Ocean.

7. Predicting the Next Eruption

Schaefer (2005) presented a new method for predicting the date of the next eruption of a recurrent nova based on the requirement that some constant amount of mass must be accumulated by the white dwarf between eruptions. Accretion rates vary substantially (Schaefer 2010; and see Figure 1), so the interval between eruptions (T ) depends on the average accretion during that time. If the accretion rate is high then the interval will be short, while if the accretion rate is low then T will be high. For U Sco, the blue light is dominated by the accretion disk, so the blue flux (F_B) will be a measure of the accretion rate. In particular for U Sco, the accretion rate will be proportional to F^{1.5}_B (Schaefer 2005). By averaging F^{1.5}_B over each interval T , we can derive a quantity that is proportional to the average accretion rate. Then, ⟨F^{1.5}_B ⟩T should be proportional to the total mass accreted

– 12 –

between eruptions, which should be a constant. Schaefer (2005) found that this quantity is indeed constant for four intervals for T Pyx and three intervals for U Sco (despite widely varying values of T for each system), with this providing a good test of nova trigger theory. These observed values for ⟨F^{1.5}_B ⟩T provide empirical measures of the mass required to trigger the eruptions. Then, based on the observed B magnitudes up until 2005, Schaefer (2005) was able to predict that U Sco would next erupt in 2009.3 ± 1.0. Schaefer (2010) updated the situation to arrive at the same predicted date. As noted above, the actual eruption on 2010.1 falls well within this prediction.

Now, with the full pre-eruption light curve, we can better test the prediction and we can refine the constant for use in predicting the next eruption. To this end, we have first converted the B-band magnitudes to flux units where B=18 is taken to be the unit flux (F_{B,18}), which equals 10^{(18−B)/2.5}. The accretion rate will then be proportional to F^{1.5}_{B,18}. To get the time averaged value from 2000-2010.1, we should not simply average all the values, as this would produce a high weight to the behavior of U Sco during 2008 and 2009 (during which the majority of the B-band magnitudes were taken). Instead, we have taken time intervals and combined them with weights given by their duration. In Table 2, we list the average values of the measured F^{1.5}_{B,18} for three intervals with roughly constant frequency of observations. The uncertainty in these averages is the RMS scatter divided by the square root of the number of observations. The durations of these intervals were then used as weights for averaging the intervals, and the uncertainty in the overall average comes from the usual propagation of errors. The resultant average over the entire interval between the 1999.2 and 2010.1 eruption is listed in Table 2. In all, ⟨F^{1.5}_{B,18}⟩ = 0.577 ± 0.045.

Schaefer (2005) produces values of ⟨F^{1.5}_B ⟩ for the three prior inter-eruption intervals. These need to be updated for four reasons. First, we need to standardize to the same flux level (i.e., B=18) as the unit flux. Second, we should be consistent and not include any magnitudes within phase 0.10 of the eclipse. Third, the individual observations should be formed into the averages with equal weight (instead of weighted by the measurement uncertainty) because intrinsic fluctuations are substantially larger than the measurement errors (so we would not want to give high weight to a bright point simply because it has a small error bar). Fourth, the 1969-1979 interval has only two magnitudes, so instead of determining the uncertainty based on the RMS scatter of just these two, we have equated the scatter to that during the 1987-1999 interval. The resultant ⟨F^{1.5}_{B,18}⟩ values are given in Table 2.

U Sco erupted in the years 1969, 1979, 1987, 1999, and 2010, with T values of 10.4, 7.9, 11.8, and 10.9 years for the four inter-eruption intervals. The longest interval is a factor of 1.5× the shortest interval. We see that the shortest interval has the highest average

– 13 –

accretion rate, while the longest interval has the lowest average accretion rate, and the two middle intervals have the middle average accretion rates. The four intervals in time order have ⟨F^{1.5}_{B,18}⟩T values of 5.7 ± 1.2, 5.2 ± 0.4, 6.0 ± 0.4, and 6.3 ± 0.5. (The weighted average of these four values is 5.77±0.24.) Nova trigger theory predicts that these values should be a constant. Indeed, the chi-square equals 3.4 for the hypothesis that the four values are equal to a constant, which is acceptable given the three degrees of freedom. And we see that the values are consistent with being a constant despite T varying by up to a factor of 1.5. So we have an improved confirmation of nova trigger theory.

U Sco erupted in 1945 and 1969, with an inter-eruption interval of 23.7 years. The long interval could be because one eruption was missed around 1957 (with intervals of around 11.8 and 11.9 years) or because two eruptions were missed around 1953 and 1961 (with intervals or around 7.9, 7.9, and 7.9 years). These two possibilities can be distinguished due their greatly different prediction as to the quiescent B magnitude, roughly 18.52 versus 18.30 respectively. The one measured magnitude (B=18.80±0.15 from 1954.5) suggests that the accretion rate was low, and hence that there was only one missed eruption.

When will the next eruption of U Sco occur? Over the next decade, we can keep track of the B-band magnitudes and work out when ⟨F^{1.5}_{B,18}⟩T will equal 5.77±0.24. Such a prediction will only be accurate to roughly 5 months out of ten years, which is fairly good. However, this method cannot be used yet, because we cannot predict the variations in the U Sco accretion rate. For now, the best that we can do is to use the long record of U Sco where all of its inter-eruption intervals are 10 ± 2 years. With this, we predict the next U Sco eruption to be in 2020±2.

We thank the many observers from the American Association of Variable Stars Observers for their data as used in our light curves. This work is supported under a grant from the National Science Foundation (AST 0708079). The Liverpool Telescope is operated on the island of La Palma by Liverpool John Moores University in the Spanish Observatorio del Roque de los Muchachos of the Instituto de Astrofisica de Canarias with financial support from the UK Science and Technology Facilities Council.

REFERENCES

Akerlof, C. W. et al. 2003, PASP, 115, 132

Bode, M. F. & Evans, A. 2008, Classical Novae, 2nd edition (Cambridge, Cambridge Univ.

Press)

– 14 –

Collazzi, A.C., Schaefer, B.E., Xiao, L., Pagnotta, A., Kroll, P., Löchel, K. & Henden, A.A.

2009, AJ, 138, 1846 Evans, A., Bode, M. F., O’Brien, T. J. & Darnley, M. J. 2008, RS Ophiuci (2006) and the Recurrent Nova Phenomenon (ASP Conf. 401) Hachisu, I. & Kato, M. 2006, ApJSupp, 167, 59 Landolt, A. U. 1992, AJ, 104, 340 Landolt, A. U. 2009, AJ, 137, 4186 Payne-Gaposhkin, C. 1964, The Galactic Novae (Dover, New York) Robinson, E. L. 1975, AJ, 80, 515 Schaefer, B. E. 1988, ApJ, 327, 347 Schaefer, B. E. 1990, ApJLett, 355, L39 Schaefer, B. E. 2001, IAUCirc., 7749 Schaefer, B. E. 2004, IAUCirc., 8279 Schaefer, B. E. 2005, ApJLett, 621, L53 Schaefer, B. E. 2010, ApJSupp, 187, 275 Schaefer, B. E., Harris, B. G., Dvorak, S., & Linnolt, M. 2010a, IAUCirc., 9111 Schaefer, B. E. & Ringwald, F. A. 1995, ApJLett, 447, L45 Schaefer, B. E. et al. 2010b, ATel, 2507 Simonsen, M. & MacRobert, A. 2010, Sky & Telescope, 119, No. 5, 18 Steele, I. A. et al. 2004, Proc. SPIE, 5489, 679

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 15 –

Table 1. U Sco Pre-eruption Light Curve

HJD Band Magnitude Source Phase Year

2451702.1932 CV 18.1 ± 0.1 AAVSO (LAQ) 0.038 2000.432 2451708.1195 CV 18.6 ± 0.1 AAVSO (LAQ) 0.854 2000.448 2451719.0413 CV 18.8 ± 0.1 AAVSO (LAQ) 0.729 2000.478 2452016.8446 V 17.90 ± 0.01 McDonald 2.1m 0.738 2001.293 2452018.8356 V 18.05 ± 0.02 McDonald 2.1m 0.356 2001.299 2452018.8397 R 17.69 ± 0.01 McDonald 2.1m 0.359 2001.299 2452021.7832 R 17.61 ± 0.02 McDonald 2.1m 0.751 2001.307 2452021.7864 R 17.63 ± 0.01 McDonald 2.1m 0.754 2001.307 2452021.7895 R 17.61 ± 0.02 McDonald 2.1m 0.757 2001.307 2452021.7925 R 17.54 ± 0.02 McDonald 2.1m 0.759 2001.307 2452021.7956 R 17.57 ± 0.01 McDonald 2.1m 0.761 2001.307 2452021.7986 R 17.58 ± 0.01 McDonald 2.1m 0.764 2001.307 2452021.8588 R 17.47 ± 0.01 McDonald 2.1m 0.813 2001.307 2452021.8621 V 17.84 ± 0.01 McDonald 2.1m 0.816 2001.307 2452021.9508 R 17.52 ± 0.01 McDonald 2.1m 0.888 2001.307 2452022.8163 R 17.34 ± 0.01 McDonald 2.1m 0.591 2001.310 2452022.8197 V 17.67 ± 0.01 McDonald 2.1m 0.594 2001.310 2452022.9468 V 17.74 ± 0.02 McDonald 2.1m 0.697 2001.310 2452022.9506 R 17.34 ± 0.01 McDonald 2.1m 0.700 2001.310 2452125.6972 V 17.98 ± 0.04 McDonald 2.1m 0.197 2001.591 2452125.7101 I 17.24 ± 0.03 McDonald 2.1m 0.207 2001.591 2452125.7118 V 18.24 ± 0.05 McDonald 2.1m 0.209 2001.591 2452127.6580 V 17.99 ± 0.02 McDonald 2.1m 0.790 2001.597 2452127.6594 I 17.16 ± 0.01 McDonald 2.1m 0.791 2001.597 2452127.6616 I 17.15 ± 0.02 McDonald 2.1m 0.793 2001.597 2452127.6686 V 18.00 ± 0.03 McDonald 2.1m 0.799 2001.597 2452130.6395 V 18.06 ± 0.01 McDonald 2.1m 0.213 2001.605 2452130.6480 B 18.33 ± 0.02 McDonald 2.1m 0.220 2001.605 2452426.8409 B 18.86 ± 0.02 McDonald 2.1m 0.920 2002.416 2452426.8452 B 18.83 ± 0.03 McDonald 2.1m 0.924 2002.416 2452426.8497 B 18.92 ± 0.03 McDonald 2.1m 0.927 2002.416 2452426.8537 V 18.35 ± 0.02 McDonald 2.1m 0.931 2002.416 2452426.8587 V 18.17 ± 0.02 McDonald 2.1m 0.935 2002.416 2452426.8624 V 18.38 ± 0.03 McDonald 2.1m 0.938 2002.416 2452431.6794 B 18.17 ± 0.01 McDonald 2.1m 0.852 2002.429 2452431.6834 B 18.15 ± 0.01 McDonald 2.1m 0.856 2002.429 2452431.6863 I 17.34 ± 0.01 McDonald 2.1m 0.858 2002.429 2452431.6879 I 17.36 ± 0.02 McDonald 2.1m 0.859 2002.429 2452761.5052 CR 17.9 ± 0.1 AAVSO (MLF) 0.884 2003.332 2452763.4203 CR 17.7 ± 0.1 AAVSO (MLF) 0.440 2003.337 2452765.8658 I 17.61 ± 0.02 McDonald 0.8m 0.428 2003.344 2452765.8724 B 19.03 ± 0.04 McDonald 0.8m 0.433 2003.344 2452769.7860 I 17.36 ± 0.02 McDonald 0.8m 0.613 2003.355 2452769.7926 B 18.73 ± 0.04 McDonald 0.8m 0.619 2003.355 2452786.7196 I 16.61 ± 0.02 McDonald 0.8m 0.375 2003.401 2452786.7243 V 18.13 ± 0.03 McDonald 0.8m 0.378 2003.401

– 16 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2452891.2341 CR 17.3 ± 0.1 AAVSO (MLF) 0.308 2003.687 2453054.5003 CR 17.5 ± 0.1 AAVSO (MLF) 0.986 2004.134 2453054.6003 CR 17.5 ± 0.1 AAVSO (MLF) 0.067 2004.134 2453068.5397 V 17.5 ± 0.1 AAVSO (MLF) 0.395 2004.173 2453082.9035 U 19.03 ± 0.06 McDonald 0.8m 0.067 2004.212 2453082.9111 B 19.30 ± 0.04 McDonald 0.8m 0.074 2004.212 2453082.9153 V 18.65 ± 0.03 McDonald 0.8m 0.077 2004.212 2453082.9247 R 18.18 ± 0.03 McDonald 0.8m 0.085 2004.212 2453082.9288 I 17.59 ± 0.04 McDonald 0.8m 0.088 2004.212 2453092.5279 CR 17.2 ± 0.1 AAVSO (MLF) 0.889 2004.238 2453130.3553 CR 17.8 ± 0.1 AAVSO (MLF) 0.629 2004.342 2453136.6145 CR 17.5 ± 0.1 AAVSO (MLF) 0.715 2004.359 2453152.4188 CR 17.7 ± 0.1 AAVSO (MLF) 0.559 2004.402 2453171.2315 CR 17.6 ± 0.1 AAVSO (MLF) 0.847 2004.454 2453172.2325 CR 17.5 ± 0.1 AAVSO (MLF) 0.660 2004.456 2453182.2841 CR 17.4 ± 0.1 AAVSO (MLF) 0.829 2004.484 2453187.7869 V 18.16 ± 0.16 CTIO 1.0m 0.301 2004.499 2453187.7885 V 18.27 ± 0.07 CTIO 1.0m 0.302 2004.499 2453187.7934 R 17.99 ± 0.05 CTIO 1.0m 0.306 2004.499 2453187.7979 I 17.36 ± 0.06 CTIO 1.0m 0.309 2004.499 2453187.8024 I 17.43 ± 0.05 CTIO 1.0m 0.313 2004.499 2453187.8104 B 18.29 ± 0.11 CTIO 1.0m 0.320 2004.499 2453189.4895 R 17.98 ± 0.06 CTIO 1.0m 0.684 2004.504 2453189.4911 B 18.58 ± 0.07 CTIO 1.0m 0.685 2004.504 2453189.4988 B 18.67 ± 0.05 CTIO 1.0m 0.692 2004.504 2453189.5065 V 18.33 ± 0.03 CTIO 1.0m 0.698 2004.504 2453189.5144 R 17.91 ± 0.02 CTIO 1.0m 0.704 2004.504 2453189.5225 I 17.43 ± 0.02 CTIO 1.0m 0.711 2004.504 2453189.5733 I 17.48 ± 0.08 CTIO 1.0m 0.752 2004.504 2453189.5741 I 17.46 ± 0.03 CTIO 1.0m 0.753 2004.504 2453189.5814 I 17.47 ± 0.02 CTIO 1.0m 0.759 2004.504 2453189.6682 I 17.39 ± 0.07 CTIO 1.0m 0.829 2004.504 2453189.6705 I 17.41 ± 0.02 CTIO 1.0m 0.831 2004.504 2453189.6781 I 17.42 ± 0.02 CTIO 1.0m 0.837 2004.504 2453191.4873 I 17.39 ± 0.02 CTIO 1.0m 0.308 2004.509 2453191.4948 I 17.47 ± 0.03 CTIO 1.0m 0.314 2004.509 2453191.5191 I 17.41 ± 0.03 CTIO 1.0m 0.333 2004.509 2453191.5265 I 17.36 ± 0.02 CTIO 1.0m 0.339 2004.509 2453191.5443 I 17.42 ± 0.03 CTIO 1.0m 0.354 2004.509 2453191.5521 I 17.40 ± 0.02 CTIO 1.0m 0.360 2004.509 2453191.5761 I 17.44 ± 0.03 CTIO 1.0m 0.380 2004.509 2453191.5836 I 17.44 ± 0.03 CTIO 1.0m 0.386 2004.509 2453191.6033 I 17.56 ± 0.04 CTIO 1.0m 0.402 2004.510 2453191.6105 I 17.50 ± 0.03 CTIO 1.0m 0.408 2004.510 2453191.6607 I 17.51 ± 0.03 CTIO 1.0m 0.449 2004.510 2453191.6696 I 17.54 ± 0.03 CTIO 1.0m 0.456 2004.510

– 17 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2453191.6923 I 17.46 ± 0.03 CTIO 1.0m 0.474 2004.510 2453191.6995 I 17.49 ± 0.03 CTIO 1.0m 0.480 2004.510 2453191.7078 I 17.52 ± 0.03 CTIO 1.0m 0.487 2004.510 2453191.7153 I 17.56 ± 0.03 CTIO 1.0m 0.493 2004.510 2453191.7225 I 17.53 ± 0.03 CTIO 1.0m 0.499 2004.510 2453191.7300 I 17.54 ± 0.04 CTIO 1.0m 0.505 2004.510 2453191.7373 I 17.55 ± 0.04 CTIO 1.0m 0.511 2004.510 2453191.7448 I 17.54 ± 0.04 CTIO 1.0m 0.517 2004.510 2453191.7520 I 17.54 ± 0.04 CTIO 1.0m 0.523 2004.510 2453191.7594 I 17.42 ± 0.04 CTIO 1.0m 0.529 2004.510 2453191.7667 I 17.47 ± 0.04 CTIO 1.0m 0.535 2004.510 2453191.7743 I 17.46 ± 0.04 CTIO 1.0m 0.541 2004.510 2453191.7816 I 17.47 ± 0.05 CTIO 1.0m 0.547 2004.510 2453192.5670 I 17.30 ± 0.03 CTIO 1.0m 0.185 2004.512 2453194.6257 I 17.31 ± 0.03 CTIO 1.0m 0.858 2004.518 2453194.6311 I 17.36 ± 0.03 CTIO 1.0m 0.862 2004.518 2453195.4959 I 17.31 ± 0.02 CTIO 1.0m 0.565 2004.520 2453195.4984 I 17.33 ± 0.02 CTIO 1.0m 0.567 2004.520 2453195.5132 I 17.33 ± 0.02 CTIO 1.0m 0.579 2004.520 2453195.5204 I 17.34 ± 0.02 CTIO 1.0m 0.585 2004.520 2453195.5277 I 17.30 ± 0.02 CTIO 1.0m 0.591 2004.520 2453195.5350 I 17.29 ± 0.02 CTIO 1.0m 0.597 2004.520 2453195.5424 I 17.27 ± 0.02 CTIO 1.0m 0.603 2004.520 2453195.5496 I 17.25 ± 0.02 CTIO 1.0m 0.609 2004.520 2453195.5569 I 17.25 ± 0.02 CTIO 1.0m 0.615 2004.520 2453195.5642 I 17.26 ± 0.02 CTIO 1.0m 0.621 2004.520 2453195.5716 I 17.25 ± 0.02 CTIO 1.0m 0.627 2004.520 2453195.5788 I 17.28 ± 0.02 CTIO 1.0m 0.633 2004.520 2453195.5861 I 17.30 ± 0.02 CTIO 1.0m 0.639 2004.520 2453195.5934 I 17.28 ± 0.02 CTIO 1.0m 0.644 2004.520 2453195.6007 I 17.29 ± 0.02 CTIO 1.0m 0.650 2004.520 2453195.6080 I 17.31 ± 0.02 CTIO 1.0m 0.656 2004.520 2453195.6171 I 17.28 ± 0.02 CTIO 1.0m 0.664 2004.521 2453195.6244 I 17.25 ± 0.02 CTIO 1.0m 0.670 2004.521 2453195.6316 I 17.21 ± 0.02 CTIO 1.0m 0.676 2004.521 2453195.6389 I 17.23 ± 0.02 CTIO 1.0m 0.681 2004.521 2453195.6463 I 17.24 ± 0.02 CTIO 1.0m 0.687 2004.521 2453195.6536 I 17.23 ± 0.02 CTIO 1.0m 0.693 2004.521 2453195.6609 I 17.23 ± 0.02 CTIO 1.0m 0.699 2004.521 2453196.4771 I 17.23 ± 0.02 CTIO 1.0m 0.363 2004.523 2453196.4920 I 17.24 ± 0.02 CTIO 1.0m 0.375 2004.523 2453196.4993 I 17.27 ± 0.02 CTIO 1.0m 0.381 2004.523 2453196.5065 I 17.28 ± 0.02 CTIO 1.0m 0.386 2004.523 2453196.5141 I 17.29 ± 0.02 CTIO 1.0m 0.393 2004.523 2453196.5274 I 17.31 ± 0.02 CTIO 1.0m 0.403 2004.523 2453196.5361 I 17.32 ± 0.03 CTIO 1.0m 0.411 2004.523

– 18 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2453196.5446 I 17.33 ± 0.03 CTIO 1.0m 0.417 2004.523 2453196.5678 I 17.34 ± 0.03 CTIO 1.0m 0.436 2004.523 2453196.5678 I 17.31 ± 0.03 CTIO 1.0m 0.436 2004.523 2453196.5838 I 17.36 ± 0.03 CTIO 1.0m 0.449 2004.523 2453196.5960 I 17.39 ± 0.02 CTIO 1.0m 0.459 2004.523 2453196.6038 I 17.37 ± 0.02 CTIO 1.0m 0.466 2004.523 2453196.6123 I 17.45 ± 0.02 CTIO 1.0m 0.472 2004.523 2453196.6195 I 17.42 ± 0.03 CTIO 1.0m 0.478 2004.523 2453196.6268 I 17.44 ± 0.02 CTIO 1.0m 0.484 2004.523 2453196.6342 I 17.39 ± 0.03 CTIO 1.0m 0.490 2004.523 2453196.6415 I 17.52 ± 0.03 CTIO 1.0m 0.496 2004.523 2453196.6487 I 17.49 ± 0.02 CTIO 1.0m 0.502 2004.523 2453196.6563 I 17.47 ± 0.03 CTIO 1.0m 0.508 2004.523 2453196.6636 I 17.45 ± 0.03 CTIO 1.0m 0.514 2004.523 2453196.6788 I 17.42 ± 0.03 CTIO 1.0m 0.526 2004.523 2453196.6893 I 17.41 ± 0.03 CTIO 1.0m 0.535 2004.523 2453196.6965 I 17.40 ± 0.03 CTIO 1.0m 0.541 2004.523 2453196.7037 I 17.41 ± 0.03 CTIO 1.0m 0.547 2004.523 2453196.7184 I 17.30 ± 0.02 CTIO 1.0m 0.559 2004.524 2453196.7209 I 17.35 ± 0.03 CTIO 1.0m 0.561 2004.524 2453196.7352 I 17.35 ± 0.03 CTIO 1.0m 0.572 2004.524 2453196.7436 I 17.28 ± 0.03 CTIO 1.0m 0.579 2004.524 2453196.7474 I 17.28 ± 0.03 CTIO 1.0m 0.582 2004.524 2453196.7617 I 17.26 ± 0.03 CTIO 1.0m 0.594 2004.524 2453196.7690 I 17.22 ± 0.03 CTIO 1.0m 0.600 2004.524 2453197.5817 I 17.26 ± 0.02 CTIO 1.0m 0.260 2004.526 2453197.5894 R 17.71 ± 0.01 CTIO 1.0m 0.267 2004.526 2453197.5971 V 18.10 ± 0.02 CTIO 1.0m 0.273 2004.526 2453197.6048 B 18.40 ± 0.03 CTIO 1.0m 0.279 2004.526 2453197.6124 U 18.13 ± 0.08 CTIO 1.0m 0.285 2004.526 2453197.7114 I 17.25 ± 0.02 CTIO 1.0m 0.366 2004.526 2453199.4870 I 17.30 ± 0.03 CTIO 1.0m 0.809 2004.531 2453199.4943 I 17.25 ± 0.04 CTIO 1.0m 0.815 2004.531 2453199.5017 I 17.22 ± 0.04 CTIO 1.0m 0.821 2004.531 2453199.5644 I 17.30 ± 0.02 CTIO 1.0m 0.872 2004.531 2453199.5720 I 17.29 ± 0.02 CTIO 1.0m 0.878 2004.531 2453199.5795 I 17.27 ± 0.04 CTIO 1.0m 0.884 2004.531 2453199.6256 I 17.34 ± 0.04 CTIO 1.0m 0.921 2004.531 2453199.6354 I 17.39 ± 0.05 CTIO 1.0m 0.929 2004.532 2453199.6499 I 17.38 ± 0.06 CTIO 1.0m 0.941 2004.532 2453201.2230 CR 17.9 ± 0.1 AAVSO (MLF) 0.219 2004.536 2453209.2464 CR 17.8 ± 0.1 AAVSO (MLF) 0.740 2004.558 2453223.2763 CR 17.9 ± 0.1 AAVSO (MLF) 0.141 2004.596 2453237.2060 CR 17.7 ± 0.1 AAVSO (MLF) 0.461 2004.634 2453251.2566 CR 17.8 ± 0.1 AAVSO (MLF) 0.879 2004.673 2453262.2206 CR 17.8 ± 0.1 AAVSO (MLF) 0.789 2004.703

– 19 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2453282.1998 CR 17.6 ± 0.1 AAVSO (MLF) 0.025 2004.758 2453288.2243 CR 17.5 ± 0.1 AAVSO (MLF) 0.921 2004.774 2453634.5334 B 18.46 ± 0.02 SMARTS 1.3m 0.348 2005.722 2453634.5399 V 17.94 ± 0.02 SMARTS 1.3m 0.353 2005.722 2453634.5447 R 17.60 ± 0.02 SMARTS 1.3m 0.357 2005.722 2453634.5488 I 17.14 ± 0.02 SMARTS 1.3m 0.360 2005.722 2453793.7702 CR 18.58 ± 0.02 AAVSO (MDJ) 0.751 2006.158 2453793.7702 CV 18.86 ± 0.02 AAVSO (MDJ) 0.751 2006.158 2453799.8147 B 18.09 ± 0.02 SMARTS 1.3m 0.663 2006.175 2453799.8212 V 17.62 ± 0.02 SMARTS 1.3m 0.668 2006.175 2453799.8260 R 17.34 ± 0.02 SMARTS 1.3m 0.672 2006.175 2453799.8303 I 16.90 ± 0.02 SMARTS 1.3m 0.676 2006.175 2453825.5522 CR 18.0 ± 0.1 AAVSO (MLF) 0.578 2006.245 2453829.6545 CR 17.5 ± 0.1 AAVSO (MLF) 0.912 2006.256 2453837.5751 CR 17.5 ± 0.1 AAVSO (MLF) 0.349 2006.278 2453855.5271 CR 17.8 ± 0.1 AAVSO (MLF) 0.937 2006.327 2453919.2248 CR 17.7 ± 0.1 AAVSO (MLF) 0.701 2006.502 2453954.2322 CR 17.2 ± 0.1 AAVSO (MLF) 0.150 2006.597 2454175.5648 CR 18.5 ± 0.1 AAVSO (MLF) 0.015 2007.203 2454214.6058 CR 17.5 ± 0.1 AAVSO (MLF) 0.742 2007.310 2454264.4516 CR 17.4 ± 0.1 AAVSO (MLF) 0.249 2007.447 2454310.2360 CR 17.9 ± 0.1 AAVSO (MLF) 0.455 2007.572 2454507.4885 CR 17.8 ± 0.1 AAVSO (MLF) 0.752 2008.112 2454513.6321 CR 17.8 ± 0.1 AAVSO (MLF) 0.744 2008.129 2454527.9007 B 18.50 ± 0.02 SMARTS 1.3m 0.340 2008.168 2454536.8221 B 17.95 ± 0.02 SMARTS 1.3m 0.590 2008.193 2454542.8568 B 18.01 ± 0.02 SMARTS 1.3m 0.494 2008.209 2454547.8175 B 18.07 ± 0.02 SMARTS 1.3m 0.525 2008.223 2454553.8468 B 18.54 ± 0.02 SMARTS 1.3m 0.425 2008.239 2454559.8413 B 18.70 ± 0.02 SMARTS 1.3m 0.296 2008.256 2454562.5227 CR 17.6 ± 0.1 AAVSO (MLF) 0.475 2008.263 2454569.7868 B 18.34 ± 0.02 SMARTS 1.3m 0.378 2008.283 2454574.7898 B 18.85 ± 0.03 SMARTS 1.3m 0.444 2008.296 2454581.7947 B 18.92 ± 0.03 SMARTS 1.3m 0.136 2008.316 2454588.7733 B 18.43 ± 0.02 SMARTS 1.3m 0.808 2008.335 2454589.6856 B 18.35 ± 0.02 SMARTS 1.3m 0.549 2008.337 2454594.7340 B 18.35 ± 0.02 SMARTS 1.3m 0.651 2008.351 2454602.8623 B 18.74 ± 0.04 SMARTS 1.3m 0.257 2008.373 2454608.8429 B 18.81 ± 0.04 SMARTS 1.3m 0.117 2008.390 2454612.1178 V 17.9 ± 0.1 AAVSO (DIL) 0.778 2008.399 2454625.6568 B 18.43 ± 0.02 SMARTS 1.3m 0.781 2008.436 2454637.7691 B 18.45 ± 0.04 SMARTS 1.3m 0.624 2008.469 2454642.7118 B 18.70 ± 0.02 SMARTS 1.3m 0.641 2008.482 2454647.6258 B 18.32 ± 0.02 SMARTS 1.3m 0.634 2008.496 2454652.5651 B 17.94 ± 0.02 SMARTS 1.3m 0.648 2008.509 2454657.6969 B 18.09 ± 0.02 SMARTS 1.3m 0.818 2008.523

– 20 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2454663.6044 B 18.36 ± 0.03 SMARTS 1.3m 0.619 2008.540 2454668.4006 CR 17.8 ± 0.1 AAVSO (MLF) 0.516 2008.553 2454673.4072 CV 18.14 ± 0.02 AAVSO (PYG) 0.585 2008.566 2454674.6778 B 18.66 ± 0.02 SMARTS 1.3m 0.618 2008.570 2454683.6602 B 18.60 ± 0.02 SMARTS 1.3m 0.917 2008.595 2454685.2212 CR 17.7 ± 0.1 AAVSO (MLF) 0.186 2008.599 2454690.6428 B 18.11 ± 0.02 SMARTS 1.3m 0.591 2008.614 2454701.4197 CV 17.83 ± 0.02 AAVSO (PYG) 0.349 2008.643 2454702.4286 CV 17.93 ± 0.02 AAVSO (PYG) 0.169 2008.646 2454702.5739 B 18.03 ± 0.02 SMARTS 1.3m 0.287 2008.646 2454703.3935 CV 17.95 ± 0.02 AAVSO (PYG) 0.953 2008.649 2454704.4064 CV 17.61 ± 0.02 AAVSO (PYG) 0.776 2008.651 2454705.4003 CV 17.73 ± 0.02 AAVSO (PYG) 0.584 2008.654 2454706.4402 CV 17.99 ± 0.02 AAVSO (PYG) 0.429 2008.657 2454707.4081 CV 17.94 ± 0.02 AAVSO (PYG) 0.216 2008.660 2454707.6070 B 18.61 ± 0.02 SMARTS 1.3m 0.377 2008.660 2454709.3969 CV 17.75 ± 0.02 AAVSO (PYG) 0.832 2008.665 2454712.4106 CV 18.27 ± 0.02 AAVSO (PYG) 0.281 2008.673 2454713.2255 CR 18.2 ± 0.1 AAVSO (MLF) 0.943 2008.675 2454713.4125 CV 17.93 ± 0.02 AAVSO (PYG) 0.095 2008.676 2454723.3956 CV 17.61 ± 0.02 AAVSO (PYG) 0.208 2008.703 2454724.2045 CR 17.2 ± 0.1 AAVSO (MLF) 0.865 2008.706 2454726.5230 B 18.24 ± 0.02 SMARTS 1.3m 0.749 2008.712 2454727.9326 CV 17.72 ± 0.02 AAVSO (BHQ) 0.895 2008.716 2454728.9341 CV 17.78 ± 0.02 AAVSO (BHQ) 0.709 2008.719 2454732.5123 V 17.97 ± 0.04 SMARTS 1.3m 0.617 2008.728 2454732.5140 R 17.63 ± 0.03 SMARTS 1.3m 0.618 2008.728 2454732.5157 I 17.17 ± 0.04 SMARTS 1.3m 0.619 2008.728 2454732.5175 B 18.45 ± 0.05 SMARTS 1.3m 0.621 2008.728 2454733.3896 CV 18.26 ± 0.02 AAVSO (PYG) 0.330 2008.731 2454736.5041 B 18.58 ± 0.02 SMARTS 1.3m 0.861 2008.739 2454738.2362 CR 17.5 ± 0.1 AAVSO (MLF) 0.268 2008.744 2454738.5129 B 18.93 ± 0.02 SMARTS 1.3m 0.493 2008.745 2454740.5027 V 18.10 ± 0.06 SMARTS 1.3m 0.110 2008.750 2454740.5044 R 17.68 ± 0.04 SMARTS 1.3m 0.111 2008.750 2454740.5062 I 17.29 ± 0.07 SMARTS 1.3m 0.113 2008.750 2454740.5079 B 18.47 ± 0.06 SMARTS 1.3m 0.114 2008.750 2454742.5104 B 18.47 ± 0.02 SMARTS 1.3m 0.742 2008.756 2454745.4841 B 18.16 ± 0.02 SMARTS 1.3m 0.158 2008.764 2454746.3495 CV 18.07 ± 0.02 AAVSO (PYG) 0.861 2008.766 2454747.4891 B 18.62 ± 0.03 SMARTS 1.3m 0.787 2008.769 2454752.4958 V 17.78 ± 0.06 SMARTS 1.3m 0.856 2008.783 2454752.4975 R 17.46 ± 0.05 SMARTS 1.3m 0.857 2008.783 2454752.4992 I 17.11 ± 0.06 SMARTS 1.3m 0.859 2008.783 2454752.5010 B 18.18 ± 0.08 SMARTS 1.3m 0.860 2008.783 2454756.2098 CR 17.9 ± 0.1 AAVSO (MLF) 0.874 2008.793

– 21 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2454861.0752 CV 18.56 ± 0.02 AAVSO (PKV) 0.093 2009.080 2454866.0710 CV 18.51 ± 0.02 AAVSO (PKV) 0.153 2009.094 2454881.5174 CR 17.3 ± 0.1 AAVSO (MLF) 0.705 2009.136 2454884.5797 CR 17.3 ± 0.1 AAVSO (MLF) 0.194 2009.145 2454884.7501 Sloan i’ 17.16 ± 0.03 Liverpool 2.0m 0.332 2009.145 2454884.7542 B 17.88 ± 0.05 Liverpool 2.0m 0.335 2009.145 2454884.7563 V 17.46 ± 0.04 Liverpool 2.0m 0.337 2009.145 2454884.7582 V 17.45 ± 0.04 Liverpool 2.0m 0.339 2009.145 2454891.6675 Sloan i’ 17.91 ± 0.02 Liverpool 2.0m 0.954 2009.164 2454891.6712 B 18.94 ± 0.06 Liverpool 2.0m 0.957 2009.164 2454891.6736 V 18.43 ± 0.06 Liverpool 2.0m 0.959 2009.164 2454891.6752 V 18.48 ± 0.06 Liverpool 2.0m 0.960 2009.164 2454893.9344 CV 17.87 ± 0.02 AAVSO (DKS) 0.796 2009.170 2454894.8580 B 18.34 ± 0.02 SMARTS 1.3m 0.546 2009.173 2454896.0435 CV 18.12 ± 0.02 AAVSO (PKV) 0.510 2009.176 2454896.2315 CV 17.76 ± 0.02 AAVSO (NMT) 0.662 2009.177 2454896.8338 B 18.22 ± 0.02 SMARTS 1.3m 0.152 2009.178 2454896.9346 CV 17.78 ± 0.02 AAVSO (DKS) 0.234 2009.178 2454898.5941 CR 17.4 ± 0.1 AAVSO (MLF) 0.582 2009.183 2454899.1651 CV 18.0 ± 0.1 AAVSO (NMT) 0.046 2009.185 2454899.8479 B 18.16 ± 0.02 SMARTS 1.3m 0.601 2009.186 2454899.9485 CV 17.49 ± 0.02 AAVSO (DKS) 0.683 2009.187 2454901.8391 B 18.38 ± 0.03 SMARTS 1.3m 0.219 2009.192 2454901.9489 CV 18.47 ± 0.02 AAVSO (DKS) 0.309 2009.192 2454902.0434 CV 18.31 ± 0.02 AAVSO (PKV) 0.385 2009.192 2454905.1590 CV 17.79 ± 0.02 AAVSO (NMT) 0.917 2009.201 2454905.8247 B 18.36 ± 0.02 SMARTS 1.3m 0.458 2009.203 2454908.8491 B 18.30 ± 0.02 SMARTS 1.3m 0.916 2009.211 2454911.0264 CV 18.00 ± 0.02 AAVSO (PKV) 0.686 2009.217 2454911.5833 CR 17.3 ± 0.1 AAVSO (MLF) 0.138 2009.219 2454911.8143 B 18.13 ± 0.02 SMARTS 1.3m 0.326 2009.219 2454912.7420 Sloan i’ 17.46 ± 0.01 Liverpool 2.0m 0.080 2009.222 2454912.7460 B 18.31 ± 0.05 Liverpool 2.0m 0.083 2009.222 2454912.7481 V 17.83 ± 0.04 Liverpool 2.0m 0.085 2009.222 2454912.7500 V 17.81 ± 0.04 Liverpool 2.0m 0.086 2009.222 2454913.8012 B 18.47 ± 0.02 SMARTS 1.3m 0.940 2009.225 2454914.9116 CV 18.18 ± 0.02 AAVSO (DKS) 0.843 2009.228 2454914.9582 CV 17.78 ± 0.02 AAVSO (NMT) 0.881 2009.228 2454915.0132 CV 18.44 ± 0.02 AAVSO (PKV) 0.925 2009.228 2454915.6517 CR 17.5 ± 0.1 AAVSO (MLF) 0.444 2009.230 2454916.4988 CR 17.5 ± 0.1 AAVSO (MLF) 0.133 2009.232 2454916.7378 B 18.34 ± 0.02 SMARTS 1.3m 0.327 2009.233 2454917.6509 CR 17.5 ± 0.1 AAVSO (MLF) 0.069 2009.235 2454918.0053 CV 18.07 ± 0.02 AAVSO (PKV) 0.357 2009.236 2454918.5189 CR 17.9 ± 0.1 AAVSO (MLF) 0.774 2009.238 2454918.7660 B 19.20 ± 0.02 SMARTS 1.3m 0.975 2009.238

– 22 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2454919.5610 CR 17.2 ± 0.1 AAVSO (MLF) 0.621 2009.240 2454919.5940 Sloan i’ 17.36 ± 0.01 Liverpool 2.0m 0.648 2009.241 2454919.5976 B 18.24 ± 0.05 Liverpool 2.0m 0.651 2009.241 2454919.5997 V 17.70 ± 0.04 Liverpool 2.0m 0.653 2009.241 2454919.6016 V 17.71 ± 0.04 Liverpool 2.0m 0.654 2009.241 2454920.7856 B 17.96 ± 0.02 SMARTS 1.3m 0.616 2009.244 2454920.8880 CV 18.0 ± 0.1 AAVSO (DKS) 0.699 2009.244 2454921.0004 CV 18.01 ± 0.02 AAVSO (PKV) 0.791 2009.244 2454921.6982 Sloan i’ 17.28 ± 0.01 Liverpool 2.0m 0.358 2009.246 2454921.7023 B 18.09 ± 0.04 Liverpool 2.0m 0.361 2009.246 2454921.7044 V 17.64 ± 0.04 Liverpool 2.0m 0.363 2009.246 2454921.7063 V 17.66 ± 0.04 Liverpool 2.0m 0.364 2009.246 2454921.9013 CV 17.92 ± 0.02 AAVSO (DKS) 0.523 2009.247 2454922.4063 CR 17.1 ± 0.1 AAVSO (MLF) 0.933 2009.248 2454922.7853 B 18.28 ± 0.02 SMARTS 1.3m 0.241 2009.249 2454923.5023 CR 17.5 ± 0.1 AAVSO (MLF) 0.824 2009.251 2454923.5767 Sloan i’ 17.44 ± 0.03 Liverpool 2.0m 0.884 2009.251 2454923.5803 B 18.26 ± 0.05 Liverpool 2.0m 0.887 2009.251 2454923.5824 V 17.81 ± 0.04 Liverpool 2.0m 0.889 2009.251 2454923.5843 V 17.80 ± 0.03 Liverpool 2.0m 0.891 2009.251 2454924.7283 B 18.25 ± 0.02 SMARTS 1.3m 0.820 2009.255 2454925.7709 CV 18.16 ± 0.02 AAVSO (DKS) 0.668 2009.257 2454925.9883 CV 18.18 ± 0.02 AAVSO (PKV) 0.844 2009.258 2454926.1134 CV 18.09 ± 0.02 AAVSO (NMT) 0.946 2009.258 2454926.5486 CR 17.3 ± 0.1 AAVSO (MLF) 0.300 2009.260 2454926.5759 Sloan i’ 17.20 ± 0.02 Liverpool 2.0m 0.322 2009.260 2454926.5800 B 18.04 ± 0.07 Liverpool 2.0m 0.325 2009.260 2454926.5820 V 17.58 ± 0.04 Liverpool 2.0m 0.327 2009.260 2454926.5839 V 17.59 ± 0.04 Liverpool 2.0m 0.328 2009.260 2454926.7196 B 18.23 ± 0.02 SMARTS 1.3m 0.439 2009.260 2454927.5027 CR 17.7 ± 0.1 AAVSO (MLF) 0.075 2009.262 2454928.7947 B 18.49 ± 0.02 SMARTS 1.3m 0.125 2009.266 2454930.0568 CV 17.61 ± 0.02 AAVSO (BHQ) 0.151 2009.269 2454930.8615 B 18.38 ± 0.02 SMARTS 1.3m 0.804 2009.271 2454931.1072 CV 19.35 ± 0.02 AAVSO (NMT) 0.004 2009.272 2454931.6620 Sloan i’ 17.48 ± 0.03 Liverpool 2.0m 0.455 2009.274 2454931.6661 B 18.18 ± 0.08 Liverpool 2.0m 0.458 2009.274 2454931.6681 V 17.69 ± 0.06 Liverpool 2.0m 0.460 2009.274 2454931.6700 V 17.67 ± 0.06 Liverpool 2.0m 0.461 2009.274 2454932.7740 B 18.24 ± 0.03 SMARTS 1.3m 0.359 2009.277 2454933.1293 CV 17.98 ± 0.02 AAVSO (NMT) 0.647 2009.278 2454935.4532 CR 17.5 ± 0.1 AAVSO (MLF) 0.536 2009.284 2454936.7619 B 18.68 ± 0.02 SMARTS 1.3m 0.599 2009.288 2454937.5402 Sloan i’ 17.78 ± 0.03 Liverpool 2.0m 0.232 2009.290 2454937.5443 B 18.88 ± 0.10 Liverpool 2.0m 0.235 2009.290 2454937.5463 V 18.24 ± 0.05 Liverpool 2.0m 0.237 2009.290

– 23 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2454937.5482 V 18.20 ± 0.04 Liverpool 2.0m 0.238 2009.290 2454938.0613 V 18.50 ± 0.02 AAVSO (BHQ) 0.655 2009.291 2454938.4364 CR 18.6 ± 0.1 AAVSO (MLF) 0.960 2009.292 2454938.7630 B 18.70 ± 0.02 SMARTS 1.3m 0.226 2009.293 2454939.1014 CV 18.28 ± 0.02 AAVSO (NMT) 0.500 2009.294 2454940.5115 CR 17.6 ± 0.1 AAVSO (MLF) 0.646 2009.298 2454940.7541 B 18.26 ± 0.02 SMARTS 1.3m 0.844 2009.298 2454941.1800 CV 18.16 ± 0.02 AAVSO (PKV) 0.190 2009.300 2454942.5390 Sloan i’ 17.19 ± 0.06 Liverpool 2.0m 0.294 2009.303 2454942.5472 V 17.54 ± 0.13 Liverpool 2.0m 0.301 2009.303 2454942.7979 B 18.23 ± 0.02 SMARTS 1.3m 0.505 2009.304 2454943.8966 CV 18.06 ± 0.02 AAVSO (DKS) 0.397 2009.307 2454944.1991 CV 17.96 ± 0.02 AAVSO (NMT) 0.643 2009.308 2454944.7328 CV 18.35 ± 0.02 AAVSO (DKS) 0.077 2009.309 2454945.9145 CV 18.1 ± 0.1 AAVSO (DKS) 0.037 2009.313 2454947.7751 B 18.58 ± 0.02 SMARTS 1.3m 0.549 2009.318 2454947.7996 V 18.47 ± 0.02 AAVSO (CMP) 0.569 2009.318 2454947.8423 CV 18.37 ± 0.02 AAVSO (DKS) 0.604 2009.318 2454948.9029 CV 18.01 ± 0.02 AAVSO (DKS) 0.466 2009.321 2454949.3910 CR 17.6 ± 0.1 AAVSO (MLF) 0.862 2009.322 2454949.6660 Sloan i’ 17.64 ± 0.00 Liverpool 2.0m 0.086 2009.323 2454949.6701 B 18.67 ± 0.05 Liverpool 2.0m 0.089 2009.323 2454949.6721 V 18.10 ± 0.04 Liverpool 2.0m 0.091 2009.323 2454949.6740 Sloan r’ 17.91 ± 0.03 Liverpool 2.0m 0.092 2009.323 2454949.7563 CV 18.07 ± 0.02 AAVSO (DKS) 0.159 2009.323 2454949.7903 B 18.60 ± 0.02 SMARTS 1.3m 0.187 2009.323 2454951.1265 CV 18.21 ± 0.02 AAVSO (NMT) 0.273 2009.327 2454951.5689 Sloan i’ 17.50 ± 0.02 Liverpool 2.0m 0.632 2009.328 2454951.5729 B 18.52 ± 0.07 Liverpool 2.0m 0.635 2009.328 2454951.5749 V 17.99 ± 0.05 Liverpool 2.0m 0.637 2009.328 2454951.5768 Sloan r’ 17.82 ± 0.04 Liverpool 2.0m 0.639 2009.328 2454951.7800 B 18.57 ± 0.02 SMARTS 1.3m 0.804 2009.329 2454953.6866 Sloan i’ 17.63 ± 0.02 Liverpool 2.0m 0.353 2009.334 2454953.6907 B 18.55 ± 0.05 Liverpool 2.0m 0.356 2009.334 2454953.6927 V 18.02 ± 0.04 Liverpool 2.0m 0.358 2009.334 2454953.6946 Sloan r’ 17.87 ± 0.03 Liverpool 2.0m 0.360 2009.334 2454953.7107 B 18.53 ± 0.02 SMARTS 1.3m 0.373 2009.334 2454954.1088 CV 18.04 ± 0.02 AAVSO (NMT) 0.696 2009.335 2454955.6663 CR 17.7 ± 0.1 AAVSO (MLF) 0.962 2009.339 2454955.7640 B 19.40 ± 0.03 SMARTS 1.3m 0.041 2009.340 2454956.3773 CR 17.7 ± 0.1 AAVSO (MLF) 0.540 2009.341 2454956.4887 Sloan i’ 17.64 ± 0.03 Liverpool 2.0m 0.630 2009.342 2454956.4927 B 18.77 ± 0.16 Liverpool 2.0m 0.634 2009.342 2454956.4947 V 18.14 ± 0.06 Liverpool 2.0m 0.635 2009.342 2454956.4967 Sloan r’ 17.96 ± 0.06 Liverpool 2.0m 0.637 2009.342 2454959.8068 B 18.64 ± 0.03 SMARTS 1.3m 0.327 2009.351

– 24 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2454964.5124 Sloan i’ 17.74 ± 0.02 Liverpool 2.0m 0.151 2009.363 2454964.5164 B 18.89 ± 0.09 Liverpool 2.0m 0.154 2009.363 2454964.5184 V 18.20 ± 0.07 Liverpool 2.0m 0.156 2009.364 2454964.5204 Sloan r’ 18.03 ± 0.04 Liverpool 2.0m 0.157 2009.364 2454964.7029 B 18.67 ± 0.02 SMARTS 1.3m 0.306 2009.364 2454966.3226 CR 17.7 ± 0.1 AAVSO (MLF) 0.622 2009.368 2454966.5177 Sloan i’ 17.62 ± 0.03 Liverpool 2.0m 0.780 2009.369 2454966.5216 B 18.75 ± 0.06 Liverpool 2.0m 0.784 2009.369 2454966.5236 V 18.21 ± 0.06 Liverpool 2.0m 0.785 2009.369 2454966.5256 Sloan r’ 18.01 ± 0.05 Liverpool 2.0m 0.787 2009.369 2454966.6656 B 18.67 ± 0.02 SMARTS 1.3m 0.900 2009.369 2454968.3567 CR 18.1 ± 0.1 AAVSO (MLF) 0.275 2009.374 2454968.5674 Sloan i’ 17.95 ± 0.02 Liverpool 2.0m 0.446 2009.375 2454968.5714 B 18.93 ± 0.05 Liverpool 2.0m 0.449 2009.375 2454968.5734 V 18.42 ± 0.06 Liverpool 2.0m 0.451 2009.375 2454968.5754 Sloan r’ 18.24 ± 0.03 Liverpool 2.0m 0.452 2009.375 2454968.7377 B 18.74 ± 0.02 SMARTS 1.3m 0.584 2009.375 2454970.5467 CR 18.6 ± 0.1 AAVSO (MLF) 0.054 2009.380 2454970.7732 B 18.86 ± 0.02 SMARTS 1.3m 0.239 2009.381 2454971.4556 Sloan i’ 17.71 ± 0.03 Liverpool 2.0m 0.793 2009.382 2454971.4596 B 18.68 ± 0.05 Liverpool 2.0m 0.796 2009.383 2454971.4620 V 18.12 ± 0.06 Liverpool 2.0m 0.798 2009.383 2454971.4635 Sloan r’ 17.97 ± 0.04 Liverpool 2.0m 0.800 2009.383 2454972.8519 B 18.71 ± 0.02 SMARTS 1.3m 0.928 2009.386 2454972.8582 CV 18.41 ± 0.02 AAVSO (PKV) 0.933 2009.386 2454973.0938 CV 18.03 ± 0.02 AAVSO (NMT) 0.124 2009.387 2454973.1579 V 18.3 ± 0.1 AAVSO (DIL) 0.176 2009.387 2454973.9704 CV 18.07 ± 0.02 AAVSO (NMT) 0.837 2009.389 2454974.3807 CR 17.8 ± 0.1 AAVSO (MLF) 0.170 2009.391 2454974.7504 B 18.75 ± 0.02 SMARTS 1.3m 0.471 2009.392 2454975.4379 Sloan i’ 18.12 ± 0.03 Liverpool 2.0m 0.029 2009.393 2454975.4419 B 19.33 ± 0.07 Liverpool 2.0m 0.032 2009.393 2454975.4439 V 18.67 ± 0.06 Liverpool 2.0m 0.034 2009.393 2454975.4458 Sloan r’ 18.42 ± 0.07 Liverpool 2.0m 0.036 2009.393 2454975.7553 CV 18.29 ± 0.02 AAVSO (NMT) 0.287 2009.394 2454976.7628 V 18.05 ± 0.03 SMARTS 1.3m 0.106 2009.397 2454976.7644 R 17.72 ± 0.03 SMARTS 1.3m 0.107 2009.397 2454976.7661 I 17.26 ± 0.04 SMARTS 1.3m 0.109 2009.397 2454976.7678 B 18.55 ± 0.04 SMARTS 1.3m 0.110 2009.397 2454977.5431 Sloan i’ 17.63 ± 0.02 Liverpool 2.0m 0.740 2009.399 2454977.5471 B 18.61 ± 0.06 Liverpool 2.0m 0.743 2009.399 2454977.5491 V 18.10 ± 0.05 Liverpool 2.0m 0.745 2009.399 2454977.5512 Sloan r’ 17.92 ± 0.03 Liverpool 2.0m 0.747 2009.399 2454978.3128 CR 17.8 ± 0.1 AAVSO (MLF) 0.366 2009.401 2454978.3168 CR 17.6 ± 0.1 AAVSO (MLF) 0.369 2009.401 2454978.3208 CR 17.7 ± 0.1 AAVSO (MLF) 0.372 2009.401

– 25 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2454978.3238 CR 17.8 ± 0.1 AAVSO (MLF) 0.374 2009.401 2454979.5858 CR 17.8 ± 0.1 AAVSO (MLF) 0.400 2009.405 2454980.7266 B 18.63 ± 0.02 SMARTS 1.3m 0.327 2009.408 2454981.2502 CV 18.32 ± 0.02 AAVSO (NMT) 0.753 2009.409 2454981.4998 Sloan i’ 18.09 ± 0.04 Liverpool 2.0m 0.955 2009.410 2454981.5145 Sloan i’ 18.20 ± 0.03 Liverpool 2.0m 0.967 2009.410 2454981.5186 B 19.37 ± 0.08 Liverpool 2.0m 0.971 2009.410 2454981.5205 V 18.78 ± 0.07 Liverpool 2.0m 0.972 2009.410 2454981.5225 Sloan r’ 18.62 ± 0.05 Liverpool 2.0m 0.974 2009.410 2454982.6930 B 18.64 ± 0.02 SMARTS 1.3m 0.925 2009.413 2454982.7332 CV 18.57 ± 0.02 AAVSO (NMT) 0.958 2009.413 2454983.4674 B 18.57 ± 0.06 Liverpool 2.0m 0.554 2009.415 2454983.4694 V 18.01 ± 0.04 Liverpool 2.0m 0.556 2009.415 2454983.4713 Sloan r’ 17.87 ± 0.03 Liverpool 2.0m 0.558 2009.415 2454983.5017 CR 17.7 ± 0.1 AAVSO (MLF) 0.582 2009.415 2454983.7407 B 18.33 ± 0.02 SMARTS 1.3m 0.777 2009.416 2454984.7141 B 18.23 ± 0.02 SMARTS 1.3m 0.568 2009.419 2454985.7129 B 17.90 ± 0.02 SMARTS 1.3m 0.379 2009.422 2454986.2017 CR 17.6 ± 0.1 AAVSO (MLF) 0.776 2009.423 2454986.4127 Sloan i’ 17.66 ± 0.05 Liverpool 2.0m 0.948 2009.423 2454986.4167 B 18.56 ± 0.12 Liverpool 2.0m 0.951 2009.423 2454986.4187 V 18.11 ± 0.07 Liverpool 2.0m 0.953 2009.423 2454986.4211 Sloan r’ 17.96 ± 0.04 Liverpool 2.0m 0.955 2009.423 2454986.6494 B 18.11 ± 0.02 SMARTS 1.3m 0.140 2009.424 2454987.1799 CV 17.91 ± 0.02 AAVSO (NMT) 0.571 2009.426 2454987.5817 CR 17.3 ± 0.1 AAVSO (MLF) 0.898 2009.427 2454987.7251 B 19.41 ± 0.04 SMARTS 1.3m 0.014 2009.427 2454990.7816 B 18.21 ± 0.03 SMARTS 1.3m 0.498 2009.435 2454991.7044 B 18.02 ± 0.02 SMARTS 1.3m 0.248 2009.438 2454992.4328 Sloan i’ 17.33 ± 0.02 Liverpool 2.0m 0.840 2009.440 2454992.4369 B 18.19 ± 0.04 Liverpool 2.0m 0.843 2009.440 2454992.4389 V 17.70 ± 0.05 Liverpool 2.0m 0.845 2009.440 2454992.4409 Sloan r’ 17.51 ± 0.03 Liverpool 2.0m 0.847 2009.440 2454992.7323 B 18.34 ± 0.02 SMARTS 1.3m 0.083 2009.441 2454993.6972 B 18.21 ± 0.02 SMARTS 1.3m 0.868 2009.443 2454994.0200 V 17.52 ± 0.02 AAVSO (DIL) 0.130 2009.444 2454994.7425 B 18.31 ± 0.02 SMARTS 1.3m 0.717 2009.446 2454995.3586 CR 17.8 ± 0.1 AAVSO (MLF) 0.218 2009.448 2454995.4596 Sloan i’ 17.31 ± 0.04 Liverpool 2.0m 0.300 2009.448 2454995.4636 B 18.35 ± 0.07 Liverpool 2.0m 0.303 2009.448 2454995.4656 V 17.77 ± 0.06 Liverpool 2.0m 0.305 2009.448 2454995.4675 Sloan r’ 17.60 ± 0.05 Liverpool 2.0m 0.306 2009.448 2454995.7532 B 18.29 ± 0.02 SMARTS 1.3m 0.538 2009.449 2454996.3515 CR 18.4 ± 0.1 AAVSO (MLF) 0.025 2009.451 2455002.5322 Sloan i’ 18.06 ± 0.05 Liverpool 2.0m 0.047 2009.468 2455002.5362 B 19.11 ± 0.07 Liverpool 2.0m 0.051 2009.468

– 26 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2455002.5382 V 18.48 ± 0.07 Liverpool 2.0m 0.052 2009.468 2455002.5402 Sloan r’ 18.31 ± 0.04 Liverpool 2.0m 0.054 2009.468 2455003.2653 CR 18.2 ± 0.1 AAVSO (MLF) 0.643 2009.470 2455003.9401 CV 18.31 ± 0.02 AAVSO (NMT) 0.192 2009.471 2455004.7473 V 16.94 ± 0.02 AAVSO (PSD) 0.847 2009.474 2455004.7641 V 16.96 ± 0.02 AAVSO (PSD) 0.861 2009.474 2455004.9621 CV 18.7 ± 0.1 AAVSO (NLX) 0.022 2009.474 2455005.0724 CV 18.62 ± 0.02 AAVSO (BHQ) 0.112 2009.475 2455005.3912 CR 18.3 ± 0.1 AAVSO (MLF) 0.371 2009.475 2455005.7532 V 18.06 ± 0.02 AAVSO (SRIC) 0.665 2009.476 2455006.3362 CR 18.1 ± 0.1 AAVSO (MLF) 0.139 2009.478 2455006.4882 Sloan i’ 17.70 ± 0.02 Liverpool 2.0m 0.262 2009.478 2455006.4922 B 18.76 ± 0.05 Liverpool 2.0m 0.265 2009.478 2455006.4942 V 18.22 ± 0.04 Liverpool 2.0m 0.267 2009.478 2455006.4962 Sloan r’ 18.04 ± 0.03 Liverpool 2.0m 0.269 2009.478 2455007.0498 CV 18.44 ± 0.02 AAVSO (BHQ) 0.719 2009.480 2455007.2412 CR 17.8 ± 0.1 AAVSO (MLF) 0.874 2009.480 2455007.5674 B 18.69 ± 0.02 SMARTS 1.3m 0.139 2009.481 2455008.5134 B 18.53 ± 0.02 SMARTS 1.3m 0.908 2009.484 2455009.3061 CR 18.0 ± 0.1 AAVSO (MLF) 0.552 2009.486 2455009.7414 CV 17.77 ± 0.02 AAVSO (SRIC) 0.906 2009.487 2455010.3460 CR 17.7 ± 0.1 AAVSO (MLF) 0.397 2009.489 2455010.5803 B 18.62 ± 0.02 SMARTS 1.3m 0.588 2009.490 2455010.9357 CV 18.1 ± 0.1 AAVSO (NMT) 0.876 2009.491 2455011.4751 CV 17.96 ± 0.02 AAVSO (MUY) 0.315 2009.492 2455012.4913 Sloan i’ 17.52 ± 0.01 Liverpool 2.0m 0.141 2009.495 2455012.4953 B 18.51 ± 0.06 Liverpool 2.0m 0.144 2009.495 2455012.4973 V 17.94 ± 0.05 Liverpool 2.0m 0.145 2009.495 2455012.4993 Sloan r’ 17.76 ± 0.03 Liverpool 2.0m 0.147 2009.495 2455012.6152 B 18.56 ± 0.02 SMARTS 1.3m 0.241 2009.495 2455013.0802 CV 18.06 ± 0.02 AAVSO (NMT) 0.619 2009.496 2455013.4858 B 18.92 ± 0.05 SMARTS 1.3m 0.949 2009.498 2455014.5882 B 18.45 ± 0.02 SMARTS 1.3m 0.845 2009.501 2455014.6694 CV 17.95 ± 0.02 AAVSO (NMT) 0.911 2009.501 2455015.1362 CV 18.1 ± 0.1 AAVSO (NMT) 0.290 2009.502 2455015.1558 CV 17.95 ± 0.02 AAVSO (NMT) 0.306 2009.502 2455015.3108 CR 18.1 ± 0.1 AAVSO (MLF) 0.432 2009.503 2455018.6595 B 18.42 ± 0.03 SMARTS 1.3m 0.153 2009.512 2455019.1295 CV 17.89 ± 0.02 AAVSO (NMT) 0.535 2009.513 2455019.1392 CV 17.86 ± 0.02 AAVSO (NMT) 0.543 2009.513 2455019.2445 CR 17.3 ± 0.1 AAVSO (MLF) 0.629 2009.513 2455019.6121 B 18.63 ± 0.03 SMARTS 1.3m 0.927 2009.514 2455019.7439 CV 17.93 ± 0.02 AAVSO (NMT) 0.034 2009.515 2455020.1059 CV 18.16 ± 0.02 AAVSO (NMT) 0.329 2009.516 2455020.6297 B 18.38 ± 0.03 SMARTS 1.3m 0.754 2009.517 2455020.6710 CV 17.99 ± 0.02 AAVSO (NMT) 0.788 2009.517

– 27 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2455020.7370 V 17.14 ± 0.02 AAVSO (WWL) 0.841 2009.517 2455021.1146 CV 17.96 ± 0.02 AAVSO (NMT) 0.148 2009.518 2455021.1577 CV 18.09 ± 0.02 AAVSO (NMT) 0.183 2009.519 2455021.2154 CR 17.6 ± 0.1 AAVSO (MLF) 0.230 2009.519 2455021.4884 Sloan i’ 17.63 ± 0.02 Liverpool 2.0m 0.452 2009.519 2455021.4924 B 18.47 ± 0.06 Liverpool 2.0m 0.455 2009.519 2455021.4943 V 17.95 ± 0.07 Liverpool 2.0m 0.457 2009.519 2455021.4963 Sloan r’ 17.83 ± 0.04 Liverpool 2.0m 0.459 2009.519 2455021.6017 B 18.44 ± 0.02 SMARTS 1.3m 0.544 2009.520 2455021.6496 CV 18.11 ± 0.02 AAVSO (NMT) 0.583 2009.520 2455022.2654 CR 17.6 ± 0.1 AAVSO (MLF) 0.083 2009.522 2455022.5897 B 18.45 ± 0.02 SMARTS 1.3m 0.347 2009.522 2455022.6491 CV 17.9 ± 0.1 AAVSO (NMT) 0.395 2009.523 2455022.7025 CV 18.05 ± 0.02 AAVSO (NMT) 0.439 2009.523 2455023.2803 CR 18.0 ± 0.1 AAVSO (MLF) 0.908 2009.524 2455023.5690 B 18.57 ± 0.02 SMARTS 1.3m 0.143 2009.525 2455023.6563 CV 18.04 ± 0.02 AAVSO (NMT) 0.214 2009.525 2455023.7081 CV 18.28 ± 0.02 AAVSO (NMT) 0.256 2009.526 2455023.7447 CV 18.17 ± 0.02 AAVSO (NMT) 0.286 2009.526 2455024.2232 CR 17.4 ± 0.1 AAVSO (MLF) 0.675 2009.527 2455024.7032 CV 17.91 ± 0.02 AAVSO (NMT) 0.065 2009.528 2455025.0929 CV 18.14 ± 0.02 AAVSO (NMT) 0.381 2009.529 2455025.1363 CV 18.05 ± 0.02 AAVSO (NMT) 0.417 2009.529 2455025.2142 CR 17.9 ± 0.1 AAVSO (MLF) 0.480 2009.530 2455025.6573 CV 18.28 ± 0.02 AAVSO (NMT) 0.840 2009.531 2455026.1473 CV 17.84 ± 0.02 AAVSO (NMT) 0.238 2009.532 2455026.3724 CR 18.05 ± 0.02 AAVSO (BZU) 0.421 2009.533 2455026.4402 Sloan i’ 17.69 ± 0.01 Liverpool 2.0m 0.476 2009.533 2455026.4443 B 18.60 ± 0.06 Liverpool 2.0m 0.479 2009.533 2455026.4463 V 18.11 ± 0.05 Liverpool 2.0m 0.481 2009.533 2455026.4484 Sloan r’ 17.97 ± 0.03 Liverpool 2.0m 0.483 2009.533 2455026.6593 CV 17.92 ± 0.02 AAVSO (NMT) 0.654 2009.534 2455026.6939 CV 18.0 ± 0.1 AAVSO (NMT) 0.682 2009.534 2455026.9864 CV 18.2 ± 0.1 AAVSO (NLX) 0.920 2009.535 2455027.2600 CR 17.5 ± 0.1 AAVSO (MLF) 0.142 2009.535 2455027.6750 CV 18.22 ± 0.02 AAVSO (NMT) 0.480 2009.536 2455028.0956 CV 17.88 ± 0.02 AAVSO (NMT) 0.821 2009.538 2455028.1546 CV 17.9 ± 0.1 AAVSO (NMT) 0.869 2009.538 2455028.2690 CR 18.6 ± 0.1 AAVSO (MLF) 0.962 2009.538 2455028.7536 CV 17.57 ± 0.02 AAVSO (SRIC) 0.356 2009.539 2455029.2459 CR 17.3 ± 0.1 AAVSO (MLF) 0.756 2009.541 2455029.6240 B 18.71 ± 0.02 SMARTS 1.3m 0.063 2009.542 2455029.6289 CV 18.2 ± 0.1 AAVSO (NMT) 0.067 2009.542 2455030.6482 CV 18.33 ± 0.02 AAVSO (NMT) 0.896 2009.545 2455031.2258 CR 17.7 ± 0.1 AAVSO (MLF) 0.365 2009.546 2455031.4477 CV 17.95 ± 0.02 AAVSO (PYG) 0.545 2009.547

– 28 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2455032.0822 CV 18.19 ± 0.02 AAVSO (NMT) 0.061 2009.548 2455032.2137 CR 17.6 ± 0.1 AAVSO (MLF) 0.168 2009.549 2455032.4878 Sloan i’ 17.47 ± 0.02 Liverpool 2.0m 0.391 2009.550 2455032.4918 B 18.41 ± 0.05 Liverpool 2.0m 0.394 2009.550 2455032.4938 V 17.89 ± 0.04 Liverpool 2.0m 0.396 2009.550 2455032.4958 Sloan r’ 17.77 ± 0.04 Liverpool 2.0m 0.397 2009.550 2455032.8893 CV 17.98 ± 0.02 AAVSO (NMT) 0.717 2009.551 2455032.9295 CV 17.92 ± 0.02 AAVSO (NMT) 0.750 2009.551 2455033.1077 CV 17.99 ± 0.02 AAVSO (NMT) 0.894 2009.551 2455033.2126 CR 18.7 ± 0.1 AAVSO (MLF) 0.980 2009.552 2455033.8991 CV 18.02 ± 0.02 AAVSO (NMT) 0.538 2009.553 2455034.2005 CR 17.4 ± 0.1 AAVSO (MLF) 0.783 2009.554 2455034.6668 CV 18.35 ± 0.02 AAVSO (NMT) 0.161 2009.556 2455034.7064 CV 17.78 ± 0.02 AAVSO (SRIC) 0.194 2009.556 2455035.2465 CR 17.6 ± 0.1 AAVSO (MLF) 0.633 2009.557 2455035.4884 Sloan i’ 17.47 ± 0.02 Liverpool 2.0m 0.829 2009.558 2455035.4923 B 18.49 ± 0.05 Liverpool 2.0m 0.832 2009.558 2455035.4943 V 17.95 ± 0.05 Liverpool 2.0m 0.834 2009.558 2455035.4963 Sloan r’ 17.77 ± 0.04 Liverpool 2.0m 0.836 2009.558 2455035.8740 CV 17.6 ± 0.1 AAVSO (NLX) 0.142 2009.559 2455036.1247 CV 17.84 ± 0.02 AAVSO (NMT) 0.346 2009.560 2455036.1954 CR 17.4 ± 0.1 AAVSO (MLF) 0.404 2009.560 2455036.6378 B 18.44 ± 0.02 SMARTS 1.3m 0.763 2009.561 2455036.6485 CV 18.07 ± 0.02 AAVSO (NMT) 0.772 2009.561 2455036.9427 CV 19.12 ± 0.02 AAVSO (NMT) 0.011 2009.562 2455037.1186 CV 18.07 ± 0.02 AAVSO (NMT) 0.154 2009.562 2455037.6971 CV 17.84 ± 0.02 AAVSO (NMT) 0.624 2009.564 2455037.9416 CV 18.05 ± 0.02 AAVSO (NMT) 0.823 2009.565 2455037.9820 CV 17.95 ± 0.02 AAVSO (NMT) 0.856 2009.565 2455038.0482 CV 18.05 ± 0.02 AAVSO (NMT) 0.909 2009.565 2455038.2052 CR 18.2 ± 0.1 AAVSO (MLF) 0.037 2009.565 2455038.6556 CV 18.16 ± 0.02 AAVSO (NMT) 0.403 2009.566 2455039.0178 CV 17.98 ± 0.02 AAVSO (NMT) 0.697 2009.567 2455039.2101 CR 17.5 ± 0.1 AAVSO (MLF) 0.854 2009.568 2455039.9326 CV 18.14 ± 0.02 AAVSO (NMT) 0.441 2009.570 2455040.2301 CR 17.4 ± 0.1 AAVSO (MLF) 0.682 2009.571 2455040.5758 B 19.05 ± 0.02 SMARTS 1.3m 0.963 2009.572 2455041.0937 CV 18.09 ± 0.02 AAVSO (NMT) 0.384 2009.573 2455041.2130 CR 17.9 ± 0.1 AAVSO (MLF) 0.481 2009.573 2455041.6488 B 18.43 ± 0.02 SMARTS 1.3m 0.835 2009.575 2455042.5988 B 18.58 ± 0.02 SMARTS 1.3m 0.607 2009.577 2455044.9893 V 17.22 ± 0.02 AAVSO (BHQ) 0.550 2009.584 2455046.6768 B 18.56 ± 0.03 SMARTS 1.3m 0.921 2009.588 2455046.9893 V 17.96 ± 0.02 AAVSO (BHQ) 0.175 2009.589 2455047.5894 CV 17.94 ± 0.02 AAVSO (MJLE) 0.663 2009.591 2455048.0763 CV 18.22 ± 0.02 AAVSO (NMT) 0.059 2009.592

– 29 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2455048.4355 Sloan i’ 17.52 ± 0.01 Liverpool 2.0m 0.350 2009.593 2455048.4395 B 18.45 ± 0.06 Liverpool 2.0m 0.354 2009.593 2455048.4414 V 17.93 ± 0.07 Liverpool 2.0m 0.355 2009.593 2455048.4434 Sloan r’ 17.75 ± 0.04 Liverpool 2.0m 0.357 2009.593 2455048.4733 Sloan i’ 17.57 ± 0.02 Liverpool 2.0m 0.381 2009.593 2455048.4772 B 18.52 ± 0.07 Liverpool 2.0m 0.384 2009.593 2455048.4791 V 17.96 ± 0.06 Liverpool 2.0m 0.386 2009.593 2455048.4811 Sloan r’ 17.78 ± 0.03 Liverpool 2.0m 0.388 2009.593 2455048.5534 CV 18.27 ± 0.02 AAVSO (MJLE) 0.446 2009.594 2455048.6338 B 18.47 ± 0.03 SMARTS 1.3m 0.512 2009.594 2455048.6900 CV 17.97 ± 0.02 AAVSO (NMT) 0.557 2009.594 2455049.9723 V 18.06 ± 0.02 AAVSO (BHQ) 0.599 2009.597 2455049.9777 CV 17.94 ± 0.02 AAVSO (NMT) 0.604 2009.597 2455050.0707 CV 17.8 ± 0.1 AAVSO (NMT) 0.679 2009.598 2455050.5672 CV 18.22 ± 0.02 AAVSO (MJLE) 0.083 2009.599 2455050.8958 CV 17.96 ± 0.02 AAVSO (NMT) 0.350 2009.600 2455051.9287 CV 17.95 ± 0.02 AAVSO (NMT) 0.189 2009.603 2455051.9728 CV 17.85 ± 0.02 AAVSO (NMT) 0.225 2009.603 2455052.4291 Sloan i’ 17.22 ± 0.03 Liverpool 2.0m 0.596 2009.604 2455052.4331 B 18.06 ± 0.05 Liverpool 2.0m 0.599 2009.604 2455052.4350 V 17.60 ± 0.03 Liverpool 2.0m 0.601 2009.604 2455052.4370 Sloan r’ 17.47 ± 0.03 Liverpool 2.0m 0.602 2009.604 2455053.1989 CR 17.4 ± 0.1 AAVSO (MLF) 0.222 2009.606 2455053.5649 CV 18.05 ± 0.02 AAVSO (MJLE) 0.519 2009.607 2455053.5934 B 18.19 ± 0.02 SMARTS 1.3m 0.542 2009.607 2455053.6484 V 17.43 ± 0.02 AAVSO (ARJ) 0.587 2009.608 2455053.6981 V 17.80 ± 0.02 AAVSO (MGW) 0.627 2009.608 2455054.4497 Sloan i’ 17.38 ± 0.02 Liverpool 2.0m 0.238 2009.610 2455054.4556 V 17.84 ± 0.06 Liverpool 2.0m 0.243 2009.610 2455054.4575 Sloan r’ 17.64 ± 0.03 Liverpool 2.0m 0.244 2009.610 2455054.5229 B 18.29 ± 0.02 SMARTS 1.3m 0.297 2009.610 2455054.6143 V 18.05 ± 0.02 AAVSO (ARJ) 0.372 2009.610 2455055.2948 CR 17.8 ± 0.1 AAVSO (MLF) 0.925 2009.612 2455055.9509 CV 17.92 ± 0.02 AAVSO (NMT) 0.458 2009.614 2455056.6351 CV 18.84 ± 0.02 AAVSO (NMT) 0.014 2009.616 2455056.9922 CV 17.97 ± 0.02 AAVSO (NMT) 0.304 2009.617 2455057.2436 CR 17.5 ± 0.1 AAVSO (MLF) 0.508 2009.617 2455057.5625 CV 17.99 ± 0.02 AAVSO (MJLE) 0.768 2009.618 2455057.5702 B 18.34 ± 0.02 SMARTS 1.3m 0.774 2009.618 2455057.9987 CV 18.04 ± 0.02 AAVSO (NMT) 0.122 2009.619 2455058.5564 CV 17.96 ± 0.02 AAVSO (MJLE) 0.575 2009.621 2455058.5892 B 18.18 ± 0.03 SMARTS 1.3m 0.602 2009.621 2455058.6450 CV 17.9 ± 0.1 AAVSO (NMT) 0.647 2009.621 2455059.1964 CR 17.3 ± 0.1 AAVSO (MLF) 0.095 2009.623 2455059.5504 CV 18.06 ± 0.02 AAVSO (MJLE) 0.383 2009.624 2455059.6251 CV 18.02 ± 0.02 AAVSO (NMT) 0.444 2009.624

– 30 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2455060.5543 CV 18.19 ± 0.02 AAVSO (MJLE) 0.199 2009.626 2455060.6529 CV 18.29 ± 0.02 AAVSO (NMT) 0.279 2009.627 2455061.2272 CR 17.6 ± 0.1 AAVSO (MLF) 0.746 2009.628 2455061.5862 CV 19.03 ± 0.02 AAVSO (MJLE) 0.037 2009.629 2455061.6248 CV 18.7 ± 0.1 AAVSO (NMT) 0.069 2009.629 2455062.2111 CR 17.6 ± 0.1 AAVSO (MLF) 0.545 2009.631 2455062.3873 Sloan i’ 17.58 ± 0.02 Liverpool 2.0m 0.688 2009.631 2455062.3912 B 18.59 ± 0.05 Liverpool 2.0m 0.692 2009.631 2455062.3932 V 18.06 ± 0.05 Liverpool 2.0m 0.693 2009.631 2455062.3951 Sloan r’ 17.87 ± 0.03 Liverpool 2.0m 0.695 2009.631 2455063.9631 CV 18.49 ± 0.02 AAVSO (NMT) 0.969 2009.636 2455064.2179 CR 17.7 ± 0.1 AAVSO (MLF) 0.176 2009.636 2455064.5759 CV 18.35 ± 0.02 AAVSO (MJLE) 0.467 2009.637 2455065.2878 CR 18.3 ± 0.1 AAVSO (MLF) 0.046 2009.639 2455066.2857 CR 17.6 ± 0.1 AAVSO (MLF) 0.856 2009.642 2455066.4128 Sloan i’ 17.99 ± 0.02 Liverpool 2.0m 0.960 2009.642 2455066.4165 B 18.91 ± 0.06 Liverpool 2.0m 0.963 2009.642 2455066.4183 V 18.45 ± 0.07 Liverpool 2.0m 0.964 2009.642 2455066.4201 Sloan r’ 18.33 ± 0.05 Liverpool 2.0m 0.966 2009.642 2455066.4247 CV 18.15 ± 0.02 AAVSO (PYG) 0.969 2009.643 2455067.5596 CV 18.23 ± 0.02 AAVSO (MJLE) 0.892 2009.646 2455068.2335 CR 17.8 ± 0.1 AAVSO (MLF) 0.439 2009.647 2455068.5745 CV 18.08 ± 0.02 AAVSO (MJLE) 0.716 2009.648 2455069.2264 CR 17.6 ± 0.1 AAVSO (MLF) 0.246 2009.650 2455070.2023 CR 18.4 ± 0.1 AAVSO (MLF) 0.039 2009.653 2455070.5523 CV 18.35 ± 0.02 AAVSO (MJLE) 0.324 2009.654 2455072.1991 CR 17.4 ± 0.1 AAVSO (MLF) 0.662 2009.658 2455073.2380 CR 17.8 ± 0.1 AAVSO (MLF) 0.506 2009.661 2455073.5008 B 18.65 ± 0.02 SMARTS 1.3m 0.720 2009.662 2455075.2009 CR 18.3 ± 0.1 AAVSO (MLF) 0.101 2009.667 2455076.2258 CR 18.0 ± 0.1 AAVSO (MLF) 0.934 2009.669 2455076.5441 B 19.12 ± 0.05 SMARTS 1.3m 0.193 2009.670 2455077.2117 CR 18.4 ± 0.1 AAVSO (MLF) 0.735 2009.672 2455078.2106 CR 17.9 ± 0.1 AAVSO (MLF) 0.547 2009.675 2455078.5161 B 18.76 ± 0.03 SMARTS 1.3m 0.795 2009.676 2455079.2145 CR 17.8 ± 0.1 AAVSO (MLF) 0.363 2009.678 2455079.4997 B 19.02 ± 0.08 SMARTS 1.3m 0.595 2009.678 2455079.5013 I 17.70 ± 0.06 SMARTS 1.3m 0.596 2009.678 2455079.5030 R 18.16 ± 0.05 SMARTS 1.3m 0.597 2009.678 2455079.5045 V 18.55 ± 0.07 SMARTS 1.3m 0.599 2009.678 2455080.2844 CR 17.8 ± 0.1 AAVSO (MLF) 0.232 2009.680 2455082.3062 CR 17.9 ± 0.1 AAVSO (MLF) 0.875 2009.686 2455083.5801 B 18.90 ± 0.02 SMARTS 1.3m 0.911 2009.689 2455084.1990 CR 17.8 ± 0.1 AAVSO (MLF) 0.414 2009.691 2455084.5060 CV 18.22 ± 0.02 AAVSO (MJLE) 0.663 2009.692 2455084.5538 B 18.94 ± 0.02 SMARTS 1.3m 0.702 2009.692

– 31 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2455085.3689 Sloan i’ 17.80 ± 0.02 Liverpool 2.0m 0.364 2009.694 2455085.3725 B 18.86 ± 0.07 Liverpool 2.0m 0.367 2009.694 2455085.3743 V 18.26 ± 0.06 Liverpool 2.0m 0.369 2009.694 2455085.3761 Sloan r’ 18.07 ± 0.04 Liverpool 2.0m 0.370 2009.694 2455087.1957 CR 17.5 ± 0.1 AAVSO (MLF) 0.849 2009.699 2455088.3633 Sloan i’ 17.72 ± 0.02 Liverpool 2.0m 0.798 2009.703 2455088.3669 B 18.79 ± 0.06 Liverpool 2.0m 0.801 2009.703 2455088.3688 V 18.22 ± 0.05 Liverpool 2.0m 0.802 2009.703 2455088.3706 Sloan r’ 18.03 ± 0.03 Liverpool 2.0m 0.804 2009.703 2455088.5436 CV 18.73 ± 0.02 AAVSO (MJLE) 0.944 2009.703 2455089.4934 B 18.83 ± 0.02 SMARTS 1.3m 0.716 2009.706 2455089.5215 CV 18.46 ± 0.02 AAVSO (MJLE) 0.739 2009.706 2455090.2004 CR 17.3 ± 0.1 AAVSO (MLF) 0.291 2009.708 2455091.2563 CR 18.0 ± 0.1 AAVSO (MLF) 0.149 2009.710 2455093.2561 CR 17.7 ± 0.1 AAVSO (MLF) 0.774 2009.716 2455093.5311 CV 18.90 ± 0.02 AAVSO (MJLE) 0.997 2009.717 2455094.2020 CR 17.9 ± 0.1 AAVSO (MLF) 0.543 2009.719 2455095.2039 CR 17.7 ± 0.1 AAVSO (MLF) 0.357 2009.721 2455095.5229 CV 18.15 ± 0.02 AAVSO (MJLE) 0.616 2009.722 2455096.4845 B 18.47 ± 0.02 SMARTS 1.3m 0.397 2009.725 2455096.5228 CV 18.27 ± 0.02 AAVSO (MJLE) 0.429 2009.725 2455100.5070 B 18.10 ± 0.02 SMARTS 1.3m 0.666 2009.736 2455101.2124 CR 17.6 ± 0.1 AAVSO (MLF) 0.240 2009.738 2455101.5017 B 18.23 ± 0.02 SMARTS 1.3m 0.475 2009.739 2455102.2203 CR 17.9 ± 0.1 AAVSO (MLF) 0.059 2009.741 2455102.5093 CV 18.15 ± 0.02 AAVSO (MJLE) 0.293 2009.741 2455103.4949 B 18.25 ± 0.03 SMARTS 1.3m 0.094 2009.744 2455103.5022 CV 17.98 ± 0.02 AAVSO (MJLE) 0.100 2009.744 2455104.4800 B 18.27 ± 0.03 SMARTS 1.3m 0.895 2009.747 2455104.5081 CV 18.18 ± 0.02 AAVSO (MJLE) 0.918 2009.747 2455105.4955 B 18.45 ± 0.03 SMARTS 1.3m 0.720 2009.749 2455105.5190 CV 18.02 ± 0.02 AAVSO (MJLE) 0.739 2009.750 2455106.4936 B 18.37 ± 0.03 SMARTS 1.3m 0.531 2009.752 2455106.4939 CV 18.3 ± 0.1 AAVSO (MJLE) 0.532 2009.752 2455108.5038 CV 18.3 ± 0.1 AAVSO (MJLE) 0.165 2009.758 2455109.4822 B 19.09 ± 0.06 SMARTS 1.3m 0.960 2009.760 2455110.5066 CV 18.26 ± 0.02 AAVSO (MJLE) 0.792 2009.763 2455110.8767 V 17.67 ± 0.02 AAVSO (BHQ) 0.093 2009.764 2455113.4882 B 18.68 ± 0.06 SMARTS 1.3m 0.215 2009.771 2455114.4997 B 19.40 ± 0.04 SMARTS 1.3m 0.037 2009.774 2455123.2137 CR 17.8 ± 0.1 AAVSO (MLF) 0.119 2009.798 2455123.4897 CV 18.4 ± 0.1 AAVSO (MJLE) 0.343 2009.799 2455124.4856 CV 18.5 ± 0.1 AAVSO (MJLE) 0.152 2009.801 2455126.4825 CV 18.6 ± 0.1 AAVSO (MJLE) 0.775 2009.807 2455139.7083 Visual >12.0 ± 0.1 AAVSO(LMK) 0.523 2009.843 2455141.8861 Visual >11.5 ± 0.1 AAVSO (KSH) 0.293 2009.849

– 32 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2455158.9458 CV >8.6 ± 0.1 AAVSO(DKS) 0.156 2009.896 2455159.9875 CV >8.6 ± 0.1 AAVSO(DKS) 0.003 2009.899 2455161.0292 CV >8.6 ± 0.1 AAVSO(DKS) 0.849 2009.902 2455162.1792 CV >8.6 ± 0.1 AAVSO(DKS) 0.784 2009.905 2455163.1958 CV >8.6 ± 0.1 AAVSO(DKS) 0.610 2009.907 2455163.6125 CV >8.6 ± 0.1 AAVSO(DKS) 0.949 2009.909 2455165.3625 CV >8.6 ± 0.1 AAVSO(DKS) 0.371 2009.913 2455165.9708 CV >8.6 ± 0.1 AAVSO(DKS) 0.865 2009.915 2455193.1556 Visual >14.0 ± 0.1 AAVSO(LMK) 0.957 2009.989 2455194.1535 Visual >14.3 ± 0.1 AAVSO(LMK) 0.769 2009.992 2455195.9635 V >17.4 ± 0.1 AAVSO (HBB) 0.239 2009.997 2455200.9643 V 17.6 ± 0.1 AAVSO (HBB) 0.303 2010.011 2455201.9701 V 17.40 ± 0.02 AAVSO (HBB) 0.120 2010.014 2455202.9553 V 17.75 ± 0.02 AAVSO (HBB) 0.921 2010.016 2455203.9426 V 17.6 ± 0.1 AAVSO (HBB) 0.723 2010.019 2455206.9348 CV 18.4 ± 0.1 AAVSO (MJLE) 0.154 2010.027 2455207.9399 CV 19.4 ± 0.1 AAVSO (MJLE) 0.971 2010.030 2455208.9373 V 17.8 ± 0.1 AAVSO (HBB) 0.782 2010.033 2455209.9455 V 17.6 ± 0.1 AAVSO (HBB) 0.601 2010.035 2455210.9441 CV 18.15 ± 0.02 AAVSO (MJLE) 0.413 2010.038 2455210.9527 V 18.2 ± 0.1 AAVSO (HBB) 0.420 2010.038 2455211.9532 CV 18.2 ± 0.1 AAVSO (MJLE) 0.233 2010.041 2455214.7784 Sloan i’ 17.54 ± 0.04 Liverpool 2.0m 0.529 2010.049 2455214.7820 B 18.49 ± 0.09 Liverpool 2.0m 0.531 2010.049 2455214.7838 V 17.88 ± 0.06 Liverpool 2.0m 0.533 2010.049 2455214.7857 Sloan r’ 17.75 ± 0.04 Liverpool 2.0m 0.534 2010.049 2455215.9105 CV 18.4 ± 0.1 AAVSO (MJLE) 0.449 2010.052 2455215.9524 V 17.7 ± 0.1 AAVSO (HBB) 0.483 2010.052 2455216.9534 V 17.7 ± 0.1 AAVSO (HBB) 0.296 2010.055 2455217.7734 Sloan i’ 18.07 ± 0.03 Liverpool 2.0m 0.962 2010.057 2455217.7770 B 19.18 ± 0.08 Liverpool 2.0m 0.965 2010.057 2455217.7789 V 18.59 ± 0.05 Liverpool 2.0m 0.967 2010.057 2455217.7807 Sloan r’ 18.48 ± 0.06 Liverpool 2.0m 0.968 2010.057 2455219.7638 Sloan i’ 17.73 ± 0.05 Liverpool 2.0m 0.580 2010.062 2455219.7674 B 18.76 ± 0.07 Liverpool 2.0m 0.583 2010.062 2455219.7693 V 18.15 ± 0.07 Liverpool 2.0m 0.584 2010.062 2455219.7711 Sloan r’ 17.97 ± 0.05 Liverpool 2.0m 0.586 2010.062 2455219.9308 CV 18.32 ± 0.02 AAVSO (MJLE) 0.716 2010.063 2455222.7671 Sloan i’ 18.29 ± 0.04 Liverpool 2.0m 0.021 2010.071 2455222.7708 B 19.46 ± 0.08 Liverpool 2.0m 0.024 2010.071 2455222.7726 V 18.74 ± 0.09 Liverpool 2.0m 0.025 2010.071 2455222.7744 Sloan r’ 18.55 ± 0.08 Liverpool 2.0m 0.026 2010.071 2455222.9351 CV 18.16 ± 0.02 AAVSO (MJLE) 0.157 2010.071 2455222.9628 V 18.3 ± 0.1 AAVSO (HBB) 0.180 2010.071 2455223.9232 CV 18.6 ± 0.1 AAVSO (MJLE) 0.960 2010.074 2455223.9473 V 18.2 ± 0.1 AAVSO (HBB) 0.980 2010.074

– 33 –

Table 1—Continued

HJD Band Magnitude Source Phase Year

2455224.1271 Visual >16.5 ± 0.1 AAVSO(LMK) 0.126 2010.074 2455224.1649 V >15.0 ± 0.1 ASAS-3N 0.156 2010.074 2455224.3438 CV >9.2 ± 0.10 VSLOJ(Wny) 0.302 2010.075 2455224.9385 V 7.85 ± 0.10 AAVSO(HBB) 0.785 2010.076 2455224.9720 Visual 8.1 ± 0.3 AAVSO(SCK) 0.812 2010.077 2455224.9751 V 7.98 ± 0.01 AAVSO(DKS) 0.815 2010.077

Table 2. Average Magnitudes, Colors, and Fluxes

Quantity Date Range Average RMS Number

U 2004.5 18.13 . . . 1 B 2001.6-2010.1 18.45 0.26 145 V 2000.4-2010.1 18.01 0.29 229 R 2001.2-2009.8 17.67 0.26 127 I 2001.5-2009.7 17.35 0.14 115 Sloan r’ 2009.3-2010.1 17.86 0.18 26 Sloan i’ 2009.1-2010.1 17.53 0.20 33 U-B 2004.5 -0.27 . . . 1 B-V 2005.7-2010.1 0.54 0.06 34 V-R 2001.2-2009.4 0.34 0.05 10 R-I 2004.4-2009.7 0.46 0.09 7 r’-i’ 2009.3-2010.1 0.29 0.07 33 B 2001.6-2006.2 18.45 0.29 11 B 2008.1-2008.8 18.42 0.28 34 B 2009.1-2009.8 18.46 0.26 98 B 2010.0-2010.1 18.63 0.20 2 V 2000.4-2001.7 18.07 0.33 12 V 2003.4-2006.2 18.10 0.40 9 V 2008.3-2008.8 17.91 0.20 18 V 2009.1-2009.2 17.86 0.37 9 V 2009.2-2009.3 17.92 0.26 25 V 2009.3-2009.4 18.12 0.19 23 V 2009.4-2009.5 17.93 0.46 17 V 2009.5-2009.6 17.98 0.22 58 V 2009.6-2009.7 18.06 0.22 27 V 2009.7-2009.9 18.28 0.18 13 V 2010.0-2010.1 17.97 0.33 17 F^{1.5}_{B,18} 2001.6-2006.2 0.58 0.20 11 F^{1.5}_{B,18} 2008.1-2008.8 0.60 0.23 34 F^{1.5}_{B,18} 2009.1-2010.1 0.56 0.20 100 F^{1.5}_{B,18} 1999.2-2010.1 0.58 0.05^a 145 F^{1.5}_{B,18} 1987.4-1992.2 0.50 0.03^a 26 F^{1.5}_{B,18} 1979.5-1987.4 0.66 0.05^a 4 F^{1.5}_{B,18} 1969.1-1979.5 0.55 0.12^a 2 F^{1.5}_{B,18} 1954.5 0.33 . . . 1

aThe quoted value is not the RMS scatter of the quantity, but rather is the one-sigma uncertainty in the average value.

– 34 –

Fig. 1.— U Sco light curve in B, from 2000 to 2010. The B-band light comes almost entirely from the disk and is a measure of the mass accretion rate. This light curve does not include observations within 0.1 phase of the eclipses. The light curve shows substantial short-term changes but no significant long-term variations.

– 35 –

Fig. 2.— U Sco light curve in V for the last year before eruption. The observations within 0.1 phase of eclipses are not included so as to concentrate on changes of the system brightness alone. U Sco shows frequent short timescale variations, but long-term changes are apparently not significant. In particular, U Sco does not show any pre-eruption rise or dip on timescales from one day to years before the eruption.

– 36 –

Fig. 3.— U Sco phased light curve in B and V. The two panels show the B and V magnitudes as a function of U Sco’s orbital phase for all observations from 2000 until the 2010 eruption. Each magnitude is double plotted, once for phases 0-1 and a second time with unity added to the phase, so as to ease the visibility of the eclipse. Both light curves show substantial short-term variations superposed on a flat light curve with eclipses. The eclipses look rather ragged, the result of taking one isolated point from many eclipses over which the system is varying up and down. (Time series through individual eclipses show a well-defined classic eclipse shape.) No secondary eclipse is visible in either B or V. Note that the scatter apparent outside of eclipse is much smaller during the eclipse, pointing to the flickering region being eclipsed.