arXiv:1006.0174v2 [quant-ph] 12 Dec 2011

Typeset with jpsj2.cls <ver.1.2.2> Full Paper

Proposal for an interference experiment to test the applicability of quantum theory to event-based processes^∗

Kristel Michielsen^{1 †}, Th. Lippert^{1 ‡}, M. Richter^{1 §}, B. Barbara^{2 ¶}, Seiji Miyashita^{3 ‖}, and Hans De Raedt^{4 ∗∗},

1 Institute for Advanced Simulation, Jülich Supercomputing Centre, Research Centre Jülich, D-52425 Jülich, Germany 2 Institut Néel, CNRS, 25 Ave. des Martyrs, BP 166, 38 042 Grenoble Cedex 09, France 3 Department of Physics, Graduate School of Science, The University of Tokyo, 7-3-1 Hongo, Bunkyo-Ku, Tokyo 113-8656, Japan and CREST, JST, 4-1-8 Honcho Kawaguchi, Saitama 332-0012, Japan 4 Department of Applied Physics, Zernike Institute for Advanced Materials, University of Groningen, Nijenborgh 4, NL-9747 AG Groningen, The Netherlands

We analyze a single-particle Mach-Zehnder interferometer experiment in which the path length of one arm may change (randomly or systematically) according to the value of an external two-valued variable x, for each passage of a particle through the interferometer. Quantum theory predicts an interference pattern that is independent of the sequence of the values of x. On the other hand, corpuscular models that reproduce the results of quantum optics experiments carried out up to this date show a reduced visibility and a shift of the interference pattern depending on the details of the sequence of the values of x. The proposed experiment will show that: (1) it can be described by quantum theory, and thus not by the current corpuscular models, or (2) it cannot be described by quantum theory but can be described by the corpuscular models or variations thereof, or (3) it can neither be described by quantum theory nor by corpuscular models. Therefore, the proposed experiment can be used to determine to what extent quantum theory provides a description of observed events beyond the usual statistical level.

KEYWORDS: Quantum Mechanics, interference, Mach-Zehnder interferometer

1/24

J. Phys. Soc. Jpn. Full Paper

Fig. 1. Schematic diagram of the proposed Mach-Zehnder interferometer (MZI) experiment. S: Light source; BS: 50-50 beam splitter; T_0: Fixed time-of-flight; T_1(x): Variable time-of-flight controlled by the external variable x; D, D_0, D_1: Detectors. In single photon experiments x may change before the photon enters the MZI but not during the passage of the photon through the MZI. For simplicity we consider experiments in which x takes the values −1 and +1 only. The recorded dataset for N detection events is given by {x_i, d_{0,i}, d_{1,i}, d_i|i = 1, . . . N} where d_{k,i} = 1 if detector D_k, k = 0, 1 fired and d_{k,i} = 0 otherwise, and d_i = 1 (d_i = 0) if detector D fired (did not fire). Note that the value of the experimental setting parameter x is not measured but is known and certain at each moment in time.

1. Introduction 1.1 Mach-Zehnder interferometer with light

Consider the schematic diagram (Fig. 1) of the Mach-Zehnder interferometer (MZI) experiment in which the length of the upper arm can be varied by a control parameter x, that is L_1(x) = cT_1(x) where c denotes the speed of light and T_1(x) the variable time-of-flight controlled by the variable x. The length of the lower arm is fixed and is given by L_0 = cT_0. According to Maxwell’s theory, carrying out the experiment with a fixed value of x and with a coherent monochromatic light source S with frequency ω gives for the normalized intensities

∗Accepted for publication in J. Phys. Soc. Jpn. †E-mail: k.michielsen@fz-juelich.de ‡E-mail: th.lippert@fz-juelich.de §E-mail: m.richter@fz-juelich.de ¶bernard.barbara@grenoble.cnrs.fr ‖E-mail: miya@spin.phys.s.u-tokyo.ac.jp ∗∗E-mail: h.a.de.raedt@rug.nl

2/24

J. Phys. Soc. Jpn. Full Paper I_0 and I_1, recorded by the detectors D_0 and D_1,^1 I_0 = sin^2 ω(T_0 − T_1(x)) 2 = sin^2 ϕ_0 − ϕ_1(x) 2 , (1)

I_1 = cos^2 ω(T_0 − T_1(x)) 2 = cos^2 ϕ_0 − ϕ_1(x) 2 , (2) where ϕ_0 = ωT_0 and ϕ_1(x) = ωT_1(x). Equations (1) and (2) show that the signal on the detectors D_0 and D_1, respectively, is modulated by the difference between the time-of-flights T_0 and T_1(x) in the lower and upper arm of the interferometer, respectively, or in other words by the phase difference ϕ_0 − ϕ_1(x).

1.2 Mach-Zehnder interferometer with single photons: Evidence for the particle nature of photons

Replacing the light source by a source emitting pairs of single photons yields the same interference patterns Eqs. (1) and (2), as shown in a laboratory experiment by Grangier et al..^2 Grangier et al.^2 performed two types of experiments, one with the setup of a MZI and one in which the second beam splitter has been removed. A key feature in their experiment is the use of the three-level cascade photon emission of the calcium atom. When the calcium atoms are excited to the third lowest level, they relax to the second lowest state, emitting photons of frequency f, followed by another transition to the ground state level causing photons of frequency f^′ to be emitted.^3 It is observed that each such two-step process emits two photons in two spatially well-separated directions, allowing for the cascade emission to be detected using a time-coincidence technique.^3 One of two light beams produced by the cascade is directed to detector D. The other beam is sent through a 50-50 beam splitter to detectors D_0 and D_1. Time-coincidence logic is used to establish the emission of the photons by the three level cascade process: Only if detectors D and D_0, D and D_1, or D_0 and D_1 fire, a cascade emission event occurred. Then, the absence of a coincidence between the firing of detectors D_0 and D_1 provides unambiguous evidence that the photon created in the cascade and passing through the beam splitter behaves as one indivisible entity. The analysis of the experimental data strongly supports the hypothesis that the photons created by the cascade process in the calcium atom are to be regarded as indivisible.^4

Having established the corpuscular nature of single photons, Grangier et al.^2 extend the experiment by sending the photons emerging from the beam splitter to another beam splitter, thereby constructing a MZI. Note that the mirrors do not alter the indivisible character of the photons, and that the removal of the second beam splitter yields an experimental configuration that is equivalent to the one used to demonstrate the corpuscular nature of single photons. With the second beam splitter in place, Grangier et al.^2 observe that after collecting many photons one-by-one, the normalized frequency distributions of detection counts recorded by the detectors D_0 and D_1 fit nicely to the interference patterns Eqs. (1) and (2): What they

3/24

J. Phys. Soc. Jpn. Full Paper observe is the same result as if the source would have emitted a wave. Thus, it is shown that one-by-one, these photons build up an interference pattern.

1.3 Theoretical description of single-photon Mach-Zehnder interferometer If we want to use classical concepts (Newtonian mechanics and classical electrodynamics) to interpret the results of these single-photon experiments, one must use a particle picture for the experiment in which the second beam splitter has been removed and a wave picture to explain the observation of interference when the second beam splitter is left in place. A question that is then often posed is whether photons are particles or waves, because classically they cannot be both.

Quantum theory resolves this dissension by introducing the notion of particle-wave duality and complementarity, in the sense that different experiments are required to observe the particle or wave property of photons but that they possess both. However, the three above mentioned theories are silent about the underlying physical processes by which single particles, arriving one-by-one at a detector gradually build up an interference pattern.

1.4 Event-based corpuscular model

In Refs.^{5–7} we have proposed an event-based corpuscular model, see section 4 for a short description, which has shown to reproduce the statistical predictions of quantum theory for the single beam splitter and the MZI experiment of Grangier et al..^2 For the latter experiment, the event-based corpuscular model allows for a particle-only description of the interference pattern. In a pictorial description of the simulation model, we may speak about “photons” generating the detection events. However, these so-called photons are elements of a model or theory for the real laboratory experiment only. The experimental facts are the settings of the various optical apparatuses and the detection events. What happens in between activating the source and the registration of the detection events is not measured and is therefore not known. Although in the event-based model one always has full which-path-information of the individual photons (one can always track the photons during the simulation), the photons build up an interference pattern at the detector. Hence, although, the appearance of an interference pattern is commonly considered to be characteristic for a wave, we have demonstrated that, as in experiment, it can also be build up by many photons.^{5–7} Thus, in contrast to the quantum theoretical description of the MZI experiment in terms of averages over many events, the event-based corpuscular model provides a rational, logically consistent explanation of the experimental facts in terms of causal processes that are formulated as discrete events to which one can associate “particles”.

Using the same algorithmic approach for modeling the single beam splitter and MZI experiment with single photons of Grangier et al.^2 (see Refs.^{5–7}), we also modeled Wheeler’s delayed choice experiment with single photons of Jacques et al.^8 (see Refs.^{7, 9, 10}), the quantum eraser

4/24

J. Phys. Soc. Jpn. Full Paper experiment of Schwindt et al.^{11} (see Ref.^{7, 12}), double-slit and two-beam single-photon interference experiments and the single-photon interference experiment with a Fresnel biprism of Jacques et al.^{13} (see Ref.^{7, 14}), quantum cryptography protocols (see Ref.^{15}), the Hanbury Brown-Twiss experiment of Agafonov et al.^{16} (see Ref.^{7, 17}), universal quantum computation (see Ref.^{18, 19}), the violation of Bell’s inequalities in Einstein-Podolsky-Rosen-Bohm-type of experiments, involving two photons in the singlet state, of Aspect et al.^{20, 21} and Weihs et al.^{22} (see Refs.^{7, 23–28}), and the propagation of electromagnetic plane waves through homogeneous thin films and stratified media (see Ref.^{7, 29}). A review of the simulation method and its applications is given in Ref..^7 Interactive demonstration programs, including source codes, for some of the single-photon experiments are available for download.^{30–32} A computer program to simulate single-photon Einstein-Podolsky-Rosen-Bohm experiments that violate Bell’s inequality can be found in Ref..^{25}

For many different optics experiments the event-based corpuscular model reproduces the probability distributions of quantum theory or results of Maxwell’s wave theory by assuming that photons have a particle-character only. The event-based corpuscular model is free of paradoxes that result from the assumption that photons exhibit dual, wave/particle behavior. A crucial property of the event-based corpuscular models is that they reproduce these “wave results” observed in different experiments without any change to algorithms modeling the photons and optical apparatuses.^7 These algorithms can, of course, be simplified for particular experiments. For example, if photon polarization is not essential to a given experiment, then for simplicity we can omit the photon polarization in the event-based corpuscular model of this particular experiment.

Although these algorithms can be given an interpretation as a realistic cause-and-effect description that is free of logical difficulties, it is at present impossible to decide whether or not such algorithms are realized by Nature: Only new, dedicated experiments such as the one proposed in this paper can teach us more about this intriguing question.

1.5 Applicability of quantum theoretical and corpuscular model descriptions of single-particle experiments Given the fact that the frequency distributions produced by the event-based corpuscular models cannot be distinguished from those predicted by quantum theory for the single-photon experiments performed so far and given the general belief that quantum theory can be used to describe all single-particle experiments, the key question is whether an experiment can be performed that shows a difference between the results obtained by quantum theory and those obtained by the event-based corpuscular model for this experiment. A trivial idea, that however cannot be realized in the laboratory, is to compare one MZI experiment with N photons passing through it with N identical MZI experiments in which exactly one photon passes through each of the N MZIs. Quantum theory predicts that after collecting the N single-

5/24

J. Phys. Soc. Jpn. Full Paper photon detection events in both cases the same interference pattern is obtained. However, the question whether or not for this particular example quantum theory describes what will be observed in the laboratory will remain unanswered: In the laboratory, it is very difficult, not to say practically impossible, to perform N identical experiments with N sufficiently large. On the other hand, it is clear that the event-based corpuscular model^{5–7} will not give identical results for both cases: Only in the first case will it reproduce the same interference pattern as observed in the laboratory experiment and as given by quantum theory. However, one obviously cannot refute a model on the basis of imagined outcomes of an experiment that is practically impossible to realize in the laboratory.

In Refs.^{5–7} we have shown that the event-based corpuscular model can produce frequency distributions that cannot be distinguished from those predicted by quantum theory for single photon MZI experiments that are performed in the stationary regime, that is under experimental conditions that remain the same for a relatively large number of incoming photons. For this experiment quantum theory predicts the same interference pattern independent of the number of incoming photons while for the event-based corpuscular model one can recognize a transient and a stationary regime, only the latter one giving rise to the same interference pattern as the one predicted by quantum theory. In the quantum theoretical description there is no transient regime.

The analysis of the transient regime in a laboratory single-photon experiment might be extremely difficult because most experiments require a stabilization procedure. Therefore, in most cases the first experimental recordings are discarded in the analysis. In order to study the transient effects and their eventual importance we propose the modified Mach-Zehnder experiment described in this paper. The question to answer is whether the transient effects can be observed experimentally or not. If the experiment shows transient effects in the interference pattern this would indicate that quantum theory cannot be used to describe the outcome of this modified MZI experiment.

1.6 Proposal for a single-particle interference experiment to test the applicability of quantum theory and corpuscular models

In this paper we present an analysis of a single-photon interference experiment that can be modeled in terms of particles only, that can be experimentally tested and for which the event-based corpuscular models predict that for some experimental conditions, the results differ from those predicted by quantum theory. Hence, under these conditions there are three possible conclusions:

• the experiment can be described by quantum theory, and thus not by the current eventbased corpuscular models,

6/24

J. Phys. Soc. Jpn. Full Paper • the experiment cannot be described by quantum theory but can be described by the current event-based corpuscular models or variations thereof,

• the experiment can neither be described by quantum theory nor by the current eventbased corpuscular models.

Specifically, we consider the MZI experiment (see Fig. 1) in which we allow the variable x to change before the particle enters the MZI but not during the passage of the particle through the MZI. Note that the value of x is not measured but is always known and certain. In sections 5 and 7 we demonstrate that this experiment may be used to determine the conditions under which quantum theory fails to describe single particle detection events or to refute the eventbased corpuscular model proposed in Refs.^{5, 7} which has shown to reproduce the statistical predictions of quantum theory for the MZI experiment with fixed x.

For simplicity, but not out of necessity, we only consider experiments in which x takes the values +1 and -1 and for which ϕ_1(x = +1)mod2π = 0 and ϕ_1(x = −1)mod2π = −π/2. We consider a systematic and a random procedure to change x such that x = +1 and x = −1 occur with the same frequency. In the systematic procedure we replace x by −x after the single photon source has emitted K photons. For K = 1 this procedure leads to an alternating sequence of x-values. In the random procedure we use a random number to decide whether or not we replace x by −x after the single photon source has emitted K photons. In both procedures we repeat this sequence so that the total number of photons emitted by the source equals N. Each click of the detector D_0 or D_1 is labeled by the currently known and certain value of x. We do not allow for an “on purpose” mislabeling of the detection events by a wrong value of x. After the N photons have been sent and all clicks have been registered, we count the number of detection events on D_0 and D_1 for each value of x separately, yielding the numbers N_0(x) and N_1(x). Finally, we define the normalized frequencies to detect photons by F_0(x) = N_0(x)/(N_0(x) + N_1(x)) and F_1(x) = N_1(x)/(N_0(x) + N_1(x)). Note that we made no assumption about the detection efficiency (see section 7).

2. Impact of the proposed experiment

In contrast to the event-based corpuscular model (see section 4), quantum theory predicts results that are independent of the sequence of x-values (see section 3). In quantum theory, the probability wave propagates simultaneously along both arms of the MZI. Therefore, for each value of x quantum theory predicts the corresponding interference pattern, independent of the sequence of x-values. At this moment there is no experimental test of this independence. Therefore it is worthwhile to perform an experiment as described in section 7, even if the general belief would be that quantum theory correctly describes the experiment and predicts results independent of the sequence of x-values.

7/24

J. Phys. Soc. Jpn. Full Paper 3. Quantum theory

According to wave theory,^1 the amplitudes (b_0(x), b_1(x)) of the photons in the output modes 0 and 1 of the MZI with a fixed value of x are given by ( b_0(x) b_1(x) ) = ie^{iφ′(x)} ( sin φ(x) cos φ(x) cos φ(x) − sin φ(x) ) ( a_0 a_1 ) , (3)

where the amplitudes of the photons in the input modes 0 or 1 are represented by a_0 and a_1, φ(x) = (ϕ_0 − ϕ_1(x))/2 and φ^′(x) = (ϕ_0 + ϕ_1(x))/2. For the case at hand a_1 = 0 and without loss of generality, we may take a_0 = 1.

The Copenhagen interpretation maintains that the wave function provides a complete and exhaustive description of the experiment with an individual particle.^{33, 34} Therefore, grouping all detection events of the individual photons according to the corresponding values of x at the time of their passage through the MZI, the Copenhagen interpretation predicts that the probability distributions to register detection events at D_0 are given by I_0(x = +1) = |b_0(x = +1)|^2 = 1 2 sin^2 ϕ_0 2 , (4)

I_0(x = −1) = |b_0(x = −1)|^2 = 1 2 sin^2 ϕ_0 + π/2 2 , (5) where the prefactor 1/2 comes from the fact that we have assumed that x = +1 and x = −1 occur with the same frequency. Note that Eqs. (4) and (5) are independent of the procedure that changes x.

If the detection events are not grouped according to the values of x, the Copenhagen interpretation predicts I^′_0 = 1 2 sin^2 ϕ_0 2 + 1 2 sin^2 ϕ_0 + π/2 2 . (6) Here and in the following the prime indicates that the detection events are not grouped (associated) with the current value of x at the time of detection.

Finally, if x does not change during the experiment I^{′′}_0 (x = +1) = sin^2 ϕ_0 2 , (7)

I^{′′}_0 (x = −1) = sin^2 ϕ_0 + π/2 2 , (8) where the double prime indicates that the value of x is fixed during the experiment.

The statistical interpretation maintains to provide a description of the statistical properties of an ensemble of similarly prepared systems only.^{34} For the case at hand, the output state of the MZI is represented by the density matrix ^ρ = ∑ y=±1 ρ(y), where ρ(y) = ( b^∗_0(y)b_0(y) b^∗_0(y)b_1(y) b^∗_1(y)b_0(y) b^∗_1(y)b_1(y) ) . (9)

The probability to register detection events in output channel 0 of the MZI, is given by

8/24

J. Phys. Soc. Jpn. Full Paper I_0(x) = ∑ y=±1 Tr ρ(y)^I0(x, y) where ^I_0(x, y) = ( 1 0 0 0 ) δ_{x,y}, (10) also yielding Eqs. (4)-(8).

Both the Copenhagen and the statistical interpretation predict the same outcome for the proposed experiment, as it should be because the mathematical formalism of quantum theory itself is free of interpretation. Note that the quantum theoretical description of the experiment would be different if x is not considered to be a parameter of the experimental setting which is known and certain at every moment in time, but is part of the measurement outcome and considered to be unknown until measured.

Taken literally, one may think that even for one particle the Copenhagen interpretation predicts an interference pattern but this contradicts the experiment in which only one click, either of D_0 or of D_1, is registered. This apparent contradiction is a manifestation of the quantum measurement paradox: Although quantum theory provides a recipe to compute the frequencies for observing events, it does not describe individual events, such as the arrival of a single electron at a particular position on the screen or the detection of a single photon by a particular detector.^{33} The statistical interpretation tactically avoids the measurement paradox by being silent on the issue of individual events.

If quantum theory correctly describes the experiment with varying but always known x, we expect to find for the observed frequencies at detector D_0 F_0(x = +1) ≈ I_0(x = +1) = 1 2 sin^2 ϕ_0 2 , (11)

F_0(x = −1) ≈ I_0(x = −1) = 1 2 sin^2 ϕ_0 + π/2 2 , (12) (see Eqs. (4) and (5)) independent of the procedure for changing x being systematic or random and independent of the number of emitted photons K per change of x. In fact, quantum theory predicts that the result is completely independent of the sequence of x. Note that this cannot be true in general: One could consider x = +1, . . . , +1, −1 so that there is only one event for x = −1. In this case the observed frequency does not correspond to an interference pattern although quantum theory predicts that also for this case I_0(x = −1) = sin^2(ϕ_0 + π/2)/2.

It is precisely this feature, the fact that quantum theory predicts results that are independent of the sequence of x-values, that we propose to test experimentally. Note that there is no indication, let alone a kind of proof that quantum theory, being a theory that makes predictions about statistics only, correctly describes experiments in which the procedure for preparing the state of the photon (i.e. the state before the photon is being detected) can change with each photon.

9/24

J. Phys. Soc. Jpn. Full Paper 4. Corpuscular model for interference

Although detailed accounts of the event-based corpuscular modeling approach, with applications to many different single-photon experiments have been published elsewhere,^{5–7, 9, 10, 12, 14, 15, 17–19, 23–28} for the reader’s convenience, we briefly describe the simulation technique. The basic ideas of the simulation approach are that (i) we stick to what we know about the experiment, that is we consider the experimental configuration and its outcome as input for constructing the simulation algorithm; (ii) we try to invent a procedure, algorithm or set of rules that generates the same type of data as in experiment and reproduces the averages predicted by quantum theory; (iii) we keep compatibility with macroscopic concepts.

Generally speaking, the event-based corpuscular simulation method can be viewed as a message passing and message processing method in which the photons play the role of the messengers and the optical apparatuses, such as a (polarizing) beam splitter, polarizer, wave plate, detector and so on play the role of the processors that interpret and manipulate the messages. In what follows we briefly describe how we model the photon and the optical apparatuses that are sufficient to simulate a MZI experiment. This means that here we do not consider the polarization of the photon and that we consider detectors that simply count the detection events. More sophisticated models for the photon and the detectors can be found in Refs.^{7, 9, 10, 12, 15, 23–26, 28} and,^{7, 14, 17} respectively. Note that these more sophisticated eventbased corpuscular models have also been used to simulate the MZI experiment. They would, however, unnecessarily complicate the modeling and pictorial description of the experiments we consider here. To simulate the MZI experiment we make use of the following models:

• Photon: We consider the photon to be a particle having an internal clock with one hand that rotates with a frequency f = ω/2π. Hence, the rotation velocity of the hand depends on the angular frequency ω, that is the “color” of the photon. Thus, the hand of a blue photon rotates faster than the hand of a red photon. As the photon travels from one position in space to another, the clock encodes its time of flight t modulo the period 1/f. We therefore view the photon as a messenger carrying as message the position of the clock’s hand. We encode the message as a two-dimensional unit vector e = (e_0, e_1) = (cos ωt, sin ωt). This particle model for the photon was previously used by Feynman in his theory of quantum electrodynamics.^{35} Feynman used the position of the clock’s hand to calculate the probability amplitudes. Although quantum electrodynamics resolves the wave-particle duality by saying that light is made of particles (as Newton originally thought), it is only able to calculate the probability that a photon will hit a detector, without offering a mechanism of how this actually happens.^{35} • Source: The source creates a messenger (photon), carrying a message as described above, and waits until its message has been processed by a detector before creating the next messenger. Hence, there can be no direct communication between the messengers. There-

10/24

J. Phys. Soc. Jpn. Full Paper

fore, the simulation model (trivially) satisfies Einsteins criterion of local causality. When

a messenger is created, its internal clock time is set to zero. We label the messengers and

their messages by a subscript n ≥ 0.

• Beam splitter: The processor modeling a beam splitter consists of three stages: An input

stage, a transformation stage and an output stage. The input stage has two input channels

labeled by k = 0, 1, two registers Y_k = (Y_{0,k}, Y_{1,k}) and an internal two-dimensional

vector u = (u_0, u_1) with the additional constraints that u_i ≥ 0 for i = 0, 1 and that

u_0 + u_1 = 1. The (n + 1)-th messenger carrying the message e_{n+1} = (e_{0,n+1}, e_{1,n+1})

arrives at input channel 0 or input channel 1. If the messenger arrives on input channel

0 (1), then register Y_0 (Y_1) stores the message brought by the messenger, that is Y_0 =

(e_{0,n+1}, e_{1,n+1}) (Y_1 = (e_{0,n+1}, e_{1,n+1})). Note that only one of the two registers is updated

when a messenger arrives at the processor. After arrival of the (n + 1)-th messenger on

input channel k = 0, 1 the input stage also updates its internal vector according to the rule

u_{i,n+1} = αu_{i,n} + (1 − α)δ_{i,k} where 0 < α < 1 is a parameter. The u_{k,n} can be interpreted

as (an estimate of) the probability for the arrival of a messenger on input channel k and

α can be interpreted as a parameter controling the learning process of this (estimate of

the) probability.^{5, 7}

The transformation stage takes the six values stored in the two registers Y_0, Y_1 and the

internal vector u and transforms this data according to the rule

1 √ 2 Y_{0,0} √ u_0 − Y_{1,1} √ u_1 Y_{0,1} √ u_1 + Y_{1,0} √ u_0 Y_{0,1} √ u_1 − Y_{1,0} √ u_0 Y_{0,0} √ u_0 + Y_{1,1} √ u_1 ←− Y_{0,0} √ u_0 Y_{1,0} √ u_0 Y_{0,1} √ u_1 Y_{1,1} √ u_1

, (13)

where we have omitted the messenger label (n + 1) to simplify the notation. Using two

complex numbers instead of four real numbers Eq. (13) can also be written as 1 √ 2 ( Y_{0,0} √ u_0 − Y_{1,1} √ u_1 + i(Y_{0,1} √ u_1 + Y_{1,0} √ u_0) Y_{0,1} √ u_1 − Y_{1,0} √ u_0 + i(Y_{0,0} √ u_0 + Y_{1,1} √ u_1) )

←− ( Y_{0,0} √ u_0 + iY_{1,0} √ u_0 Y_{0,1} √ u_1 + iY_{1,1} √ u_1 ) . (14)

Identifying a_0 with Y_{0,0} √ u_0 + iY_{1,0} √ u_0 and a_1 with Y_{0,1} √ u_1 + iY_{1,1} √ u_1 it is clear that

the transformation Eq. (14) plays the role of the matrix-vector multiplication ( b_0

b_1 ) = 1 √ 2 ( a_0 + ia_1

a_1 + ia_0 ) = 1 √ 2 ( 1 i i 1 ) ( a_0

a_1 ) , (15)

where the (a_0, a_1) ((b_0, b_1)) denote the amplitudes of the photons in the input (output)

output modes 0 and 1 of a beam splitter.^{5, 7}

11/24

J. Phys. Soc. Jpn. Full Paper The output stage of the processor uses the content of the four-dimensional vector in Eq. (13) to update the message carried by the (n + 1)th messenger and directs this messenger to one of its two output channels labeled by k = 0, 1. The output stage sends the (n + 1)-th messenger with message w_{n+1} = (Y_{0,0} √ u_0 − Y_{1,1} √ u_1, Y_{0,1} √ u_1 + Y_{1,0} √ u_0)/ √ 2 through output channel 0 if w^2_{0,n+1}+w^2_{1,n+1} > r where 0 < r < 1 is a uniform random number. Otherwise, it sends the message z_{n+1} = (Y_{0,1} √ u_1 − Y_{1,0} √ u_0, Y_{0,0} √ u_0 + Y_{1,1} √ u_1)/ √ 2 through output channel 1.

• Detector: In the MZI experiment the detectors are counters that simply count the number of messengers (photons) that they receive. In the modified MZI experiment we propose here, the detectors D_0 and D_1 each have two counters, one for counting detection events corresponding to the parameter setting x = −1 and one for counting detection events corresponding to the parameter setting x = +1. Hence, in total we have four counters: N_0(x = −1), N_0(x = +1), N_1(x = −1) and N_1(x = +1). Recall that x is a parameter of which the value is always known with certainty.

5. Simulation results 5.1 Detection events not grouped according to the values of x

In Fig. 2, we present results for the normalized frequency F^′_0 as a function of ϕ_0 ∈ [0, 2π] for the experiment in which x is changed according to the systematic procedure with K = 1, 10, N, where the number of particles N = 10^6. The detection events are not grouped (associated) with the value of x at the time of the detection event. From these data, we see that (1) For K = 1 (solid triangles), that is when x alternates for each photon entering the MZI, the event-based corpuscular model reproduces the statistical results of quantum theory (solid line connecting the triangles, as given by Eq. (6)).

(2) For K = 10 (open triangles), that is when x alternates for each ten photons entering the MZI, there is excellent agreement between the simulation data and the results of quantum theory (solid line connecting the triangles, as given by Eq. (6)).

(3) For K = N (bullets), that is for fixed x = +1, F^′_0 = F^{′′}_0 (x = +1) and the eventbased corpuscular model reproduces the statistical results of quantum theory (dotted line connecting the bullets, as given by Eq. (7)).

Summarizing: For fixed x, the results of the event-based corpuscular model are in excellent agreement with Eqs. (7) and (8), that is with quantum theory. For varying x and without grouping the detection events according to the value of x, the frequencies at detector D_0 obtained from the event-based corpuscular model agree perfectly with the probability distribution Eq. (6) predicted by quantum theory. The results do not depend on the number of photons (K) per change of x.

12/24

J. Phys. Soc. Jpn. Full Paper

Fig. 2. Results for the normalized frequency F^′_0 of detection events that are not grouped according to the value of x. Data are obtained from simulations employing fully classical, locally causal, corpuscular models^{5, 7} for all the components of the MZI experiment shown in Fig. 1. For each value of ϕ_0, N = 10^6 input events were generated and the model parameter α = 0.99. Dotted line: Prediction of quantum theory, see Eq. (7); Solid line: Prediction of quantum theory, see Eq. (6); Bullets: Simulation data for x = +1 fixed; Solid triangles: Simulation data for the case that x changes sign (x = +1, −1, +1, . . .) with each photon emitted, corresponding to the systematic procedure for changing x with K = 1; Open triangles: Simulation data for the case that x changes sign with every ten photons emitted, corresponding to the systematic procedure for changing x with K = 10.

5.2 Detection events grouped according to the values of x

Unlike quantum theory, which predicts the probability distributions to be independent of details of the sequence of x-values if the detection events are grouped according to the value of x (see Eqs. (4) and (5)), the event-based corpuscular model of a MZI makes specific predictions for the frequencies observed at detector D_0 that depend on the procedure to change x and on the number of particles K that pass through the MZI while x is constant.

By construction,^{5, 7} for fixed x the event-based corpuscular model can produce detection events with a frequency in perfect agreement with I^′_0(x) given by Eqs. (7) and (8) if on average half of the particles travel along the upper arm of the MZI and half of them along the lower arm. Only in this way the second beam splitter of the MZI is able to obtain correct information from the particles about the phase difference ϕ_0 − ϕ_1(x). If x is changed and if the particle

13/24

J. Phys. Soc. Jpn. Full Paper travels along the upper arm, this beam splitter still obtains the correct information about the changed phase difference. However, if x is changed and if the particle travels along the lower arm, the particle is unable to pick up the information about the change in path length of the upper arm. As a result, the second beam splitter of the MZI obtains information about the phase difference which does not correspond to the value ϕ_0 − ϕ_1(x) associated with the new value of x. In this case we say that the resulting detection event is associated with the “wrong” value of x: The detection event is generated on the basis of information about a phase difference which does not correspond to the current value of x, which by itself is always known and certain. From this description it is clear that the effect of these detection events on the observed frequencies after many detection events have been recorded, strongly depend on the value of K: If the number of changes in x is small compared to the number of photons N (K → N) then the effect becomes negligible.

From the description of the event-based corpuscular model, it follows directly that the observed frequencies at detector D_0 are given by ~I_0(x = +1) = 1 − E 2 sin^2 ϕ_0 2 + E 2 sin^2 ϕ_0 + π/2 2 , (16)

~I_0(x = −1) = 1 − E 2 sin^2 ϕ_0 + π/2 2 + E 2 sin^2 ϕ_0 2 , (17) where 0 ≤ E ≤ 1 is the rate of making wrong associations. Numerical experiments show that E ≈ 1/(2 + 2K) provides a simple, fairly accurate approximation of the rate if the random procedure to change x is used. If we would not group the detection events according to the values of x the observed frequencies at detector D_0 would simply be given by the sum of Eqs. (16) and (17), what is exactly what we described in the previous section.

Note that the notion of ”wrong association” only makes sense in the event-based model because in this model we can track individual particles when they traverse through the MZI. In contrast, in the proposed experiment (see section 7), it is impossible for the experimenter to make ”wrong associations” because as described in section 1.6 we do not allow the experimenter to mislabel on purpose the detection events by a wrong value of x. Similarly, there are no ”wrong associations” in wave theory because the wave propagates simultaneously along both arms of the interferometer and therefore always carries the correct information about the current setting of x.

In Fig. 3, we present results for the normalized frequency F_0(x = +1) as a function of ϕ_0 ∈ [0, 2π] for the experiment in which x is changed according to the systematic procedure with K = 1, 10, where the number of particles N = 10^6. The detection events are grouped (associated) with the value of x at the time of the detection event. From these data, we conclude that

(1) For K = 1 (solid triangles), that is when x alternates for each photon entering the MZI, the

14/24

J. Phys. Soc. Jpn. Full Paper

Fig. 3. Results for the normalized frequency F_0(x = +1) of detection events that are grouped according to the value of x. Data are obtained from simulations employing fully classical, locally causal, corpuscular models^{5, 7} for all the components of the MZI experiment shown in Fig. 1. For each value of ϕ_0, N = 10^6 input events were generated and the model parameter α = 0.99. Dotted line: Prediction of quantum theory, see Eq. (4); Solid triangles: Simulation data for the case that x changes sign (x = +1, −1, +1, . . .) with each photon emitted, corresponding to the systematic procedure for changing x with K = 1. The solid line through the data points is given by Eq. (16) with E = 0.333. Open triangles: Simulation data for the case that x changes sign with every ten photons emitted, corresponding to the systematic procedure for changing x with K = 10. The solid line through the data points is given by Eq. (16) with E = 0.100.

event-based corpuscular model predicts significant deviations from the results of quantum theory (dotted line, Eq. (4)). There is excellent agreement between the simulation data and Eq. (16) (solid line through the solid triangles) with E = 0.333.

(2) For K = 10 (open triangles), that is when x alternates for each ten photons entering the MZI, the difference between the data generated by the event-based corpuscular model and the results of quantum theory (dotted line, Eq. (4)) becomes rather small. There is excellent agreement between the simulation data and Eq. (16) with E = 0.100 (solid line through the open triangles).

Simulations (data not shown) confirm the intuitively evident expectation that as the number of photons K between changes of x increases, the data produced by the event-based corpuscular

15/24

J. Phys. Soc. Jpn. Full Paper

Fig. 4. Same as Fig. 3 except that x is changed according to the random procedure with K = 1 and that the solid line through the triangles is given by Eq. (16) with E = 1/(2 + 2K) = 1/4.

model converge to the prediction of quantum theory Eq. (4). This also follows directly from the analytic expression Eq. (16) because E → 0 if K → N.

In Fig. 4, we present simulation data for the case in which x is changed according to the random procedure with K = 1. Qualitatively, the results are the same as when x changes systematically (see Fig. 3). However, the rate E is different. For K = 1, E = 0.333 for the systematic procedure and E = 0.25 for the random procedure. In the case of the random procedure, simulation data for various K (not shown) are rather accurately represented by Eq. (16) with E = 1/(2 + 2K). Although the quantitative differences between the normalized frequencies F_0(x = +1) computed for the event-based corpuscular model and quantum theory are larger if the systematic procedure for changing x is used instead of the random procedure, the data obtained with the random procedure for changing x might be more useful for comparing with the outcomes of laboratory experiments, as discussed in the next section.

Summarizing: In order to see a difference between the interference patterns predicted by quantum theory and the event-based corpuscular models, a key factor in the proposed experiment is that the detection events are associated with the value of x at the time of the detection event. If the detection events are grouped according to the value of x, the frequencies of events at detector D_0 as obtained from the event-based corpuscular model are given by Eqs. (16) and (17). Note that the difference with Eq. (6) is only in the prefactors (E/2 and

16/24

J. Phys. Soc. Jpn. Full Paper (1 − E)/2 with 0 ≤ E ≤ 1 instead of 1/2) which depend on the details of the sequence of x-values.

6. Discussion

As already mentioned, quantum theory gives an accurate description of the statistics of an experiment in which the procedure of preparing the particles before they are detected does not change during the experiment. As the experiment that we propose can be performed such that this condition is not satisfied, it is of interest to perform this experiment and verify that it agrees with the quantum theoretical prediction. If the proposed experiment would show deviations from the quantum theoretical prediction, this finding does not refute quantum theory as such: It provides experimental evidence that quantum theory cannot be applied to statistical experiments in which the procedure of preparing the particles before they are detected changes in the course of the experiment.

The event-based corpuscular model^{5, 7} operates on a level that quantum theory has nothing to say about and it can easily cope with a preparation procedure that changes with each particle (K = 1). As this model reproduces the results of quantum theory under the condition that the preparation procedure is fixed (K and N large),^{5, 7} conventional quantum optics experiments cannot refute the event-based corpuscular model. However, as Figs. 3 and 4 show, the proposed MZI experiment with a phase difference alternating between ϕ_0 and ϕ_0 +π/2 (see Fig. 3) or with a phase difference randomly taking the values ϕ_0 and ϕ_0 + π/2 (see Fig. 4), can discriminate between quantum theory and the event-based corpuscular model^{5, 7} if the detection events are associated with the value of x at the time of the detection event, at least in principle. Recall that if the detection events are not grouped according to the value of x at the time of detection, both quantum theory and the event-based corpuscular model yield the same interference pattern (see Fig. 2).

To appreciate the subtilities that are involved, it is necessary to recognize that there are other experiments in which the preparation procedure is not fixed in time and for which we do not expect the predictions of quantum theory to deviate from the experimental results, independent of the pace at which the preparation procedure changes.

As an example, consider Wheeler’s delayed choice experiment with single-photons.^8 In this experiment, the random choice between the open and closed configuration of the interferometer with each passage of a photon does not affect the agreement of the experimental observations with predictions of quantum theory.^8 The reason is that a passage of a photon in the open configuration has no causal effect on the passage of a photon in the closed configuration. As the event-based corpuscular approach reproduces the results of quantum theory for Wheeler’s delayed choice experiment^9 this experiment^8 cannot be used to refute the event-based corpuscular model.

The experiment that we propose in this paper is fundamentally different from e.g.

17/24

J. Phys. Soc. Jpn. Full Paper

Fig. 5. In the realization of the proposed experiment the variable x, taking the values +1 and -1, can be changed alternately in time t at a given fixed rate. The rate at which the photons (solid circles) are emitted is assumed to be lower than the rate at which x is changed. Assuming that it is uncertain whether the source emits a photon with each trigger pulse, this experiment is similar to the case where x is changed according to the random procedure with K = 1.

Wheeler’s delayed choice experiment with photons in that the second beam splitter, being the physical cause for interference to occur at all, is present at all times and that, in a corpuscular picture, the physical state of a beam splitter may change with each photon passing through it.

7. Realization

We now address some issues that become relevant when the proposed experiment is performed in practice. Essential for the proposed experiment to refute the event-based corpuscular model or to show the aforementioned limitation of quantum theory is that the rate at which photons are emitted is lower than the rate at which the time-of-flight in the upper arm of the interferometer (see Fig. 1) is being switched between two different values. Assuming that there is uncertainty about whether or not the source emits a photon and assuming that the frequency of these pulses is incommensurate with the frequency with which x changes, to describe the experiment we may use the model in which x is changed according to the random procedure with K = 1, see Fig. 5. We emphasize that for the proposed experiment to be successful, the time-of-flight of a photon from the source to detector should be much less than the time between changes of x such that there is a one-to-one correspondence between the value of x and the photon (independent of whether it is actually detected). Equally essential is that the procedure to change the time-of-flight of the particles traveling in the upper arm of the MZI does not alter the particle’s direction towards the second beam splitter.

Refuting the event-based corpuscular model^{5, 7} or to demonstrate the aforementioned limitation of quantum theory by an experiment will be a real challenge. The central issue is to collect and analyze the experimental data properly. To see this, consider the expres-

18/24

J. Phys. Soc. Jpn. Full Paper sion for the normalized frequency of events on output channel 0. In general, that is for ϕ_1(x = +1)mod2π = 0 and ϕ_1(x = −1)mod2π = δ, the event-based corpuscular model predicts ~I_0(x = +1) = 1 − E 2 sin^2 ϕ_0 2 + E 2 sin^2 ϕ_0 − δ 2 = 1 − Δ cos(ϕ_0 − ψ) 4 , (18) where ψ = arctan(E sin δ/(1−E +E cos δ)) and Δ = (2E^2 −2E +1+2E(1−E) cos δ)^{1/2}. From Eq. (18) it follows directly that a least-square fit of a sinusoidal function to the data produced by the event-based corpuscular model could lead to the conclusion that, independent of the values of E and δ, this data is described by quantum theory, albeit with a reduced visibility (|Δ| < 1). Thus, this naive procedure to analyse data of single-photon interference experiments cannot lead to a refutation of the event-based corpuscular model nor can it be used the test the applicability of quantum theory to event-based experiments. However, the proposed experiment may be carried out such that there is a chance that the event-based corpuscular model^{5, 7} can be refuted and/or these limitations of quantum theory can be demonstrated.

Specifically, for each pulse applied to the single photon source (labeled by the subscript i), the experiment should collect the triples {x_i, d_{0,i}, d_{1,i}} for i = 1, . . . , N, N + 1, . . . , 2N, 2N + 1, . . . , 3N where d_{k,i} = 1 if detector D_k, k = 0, 1 fired (within a properly chosen time window) and d_{k,i} = 0 otherwise. Note that recording both d_{0,i} and d_{1,i} is required for ensuring the single-particle character of the experiment.^2 For each value of ϕ_0, in the first stage (the first N pulses), x = −1 is kept fixed while in the second stage of N pulses x = +1 kept fixed. Finally, to mimic a random sequence of x-values, in the third stage of N pulses x should change much faster than the pulse rate at which single photons are emitted. Assuming that the MZI is stable enough to allow a sufficient amount of triples to be collected and that the photon flux during the three stages is the same, comparison of the number of detection counts of the first and second stage with the one of the third stage, should or should not (if quantum theory applies) reveal a significant change in the detection counts (see Fig. 6). In other words, performing these three stages in one experimental run should allow one to see a reduction in visibility and a shift of the sinusoidal curve in the stage in which x changes with respect to the two other stages in which x is fixed. In experiment this staged procedure may be necessary to compare the reduced visibility (due to experimental limitations) for the cases with fixed and varying x (which according to quantum theory should all be the same). Changing the order of the stages and repeating the experiment should provide some information about the reproducibility of the experimental data.

It will not have escaped the reader that we have not made any assumption about the efficiency of detecting the photons. Although for photons this efficiency may be quite low,^{36} this should not affect the conclusions that can be drawn from the experimental data as long as this data is not contaminated by a significant fraction of dark counts. The dark counts may be reduced by using a source emitting pairs of photons in different directions and by

19/24

J. Phys. Soc. Jpn. Full Paper

Fig. 6. Results of the normalized frequency F_0(x = +1) in a three-staged MZI experiment in which the detection events are grouped according to the value of x. First stage (0 ≤ ϕ_0/2π < 3): x = −1 fixed. Second stage (3 ≤ ϕ_0/2π < 6): x = +1 fixed. Third stage (6 ≤ ϕ_0/2π < 9): x is changed according to the systematic procedure with K = 1. For each value of ϕ_0, N = 10^6 input events were generated and the model parameter α = 0.99. Symbols denote the simulation results. The solid lines are given by Eq. (7) for the first two stages and by Eq. (16) with E = 0.33 for the third stage. The dotted line is given by quantum theory (Eq. (7) for stages one and two and Eq. (4) for stage three.

correlating the detection times of the photons detected on detector D_0 or D_1 placed behind the MZI with those detected on the detector D placed on the other side of the source (see Fig. 1).

Although our proposal has been formulated in terms of single-photon experiments, it should be evident that, at least in theory, one can replace “photon” by “neutron” without altering the conclusions. In fact, a neutron experiment which resembles the modified MZI experiment we propose here has been performed,^{37} but the switching of the conditions was not correlated with the detection events.

We hope that our proposal will stimulate experimenters to take up the challenge to determine the extent to which quantum theory provides a description of event-based processes that goes beyond statistical averages or to refute event-based corpuscular models that, without invoking any concept of quantum theory, reproduce the statistical results of quantum

20/24

J. Phys. Soc. Jpn. Full Paper theory.

8. Conclusions

We have proposed a single-photon Mach-Zehnder interferometer experiment in which the preparation procedure of the photons in the Mach-Zehnder interferometer (before detection) is changing in time. Given (i) the general belief that quantum theory can be used to describe all single-photon experiments,

(ii) the fact that quantum theory gives an accurate description of the statistics of an experiment in which the procedure of preparing the particles before they are detected does not change during the experiment,

(iii) the fact that the frequency distributions produced by the event-based corpuscular models cannot be distinguished from those predicted by quantum theory for the single-photon experiments performed so far,

(iv) the fact that the interference patterns of the event-based corpuscular model for the proposed experiment do not agree with those predicted by quantum theory, makes this an interesting experiment to be carried out.

The Mach-Zehnder interferometer experiment that we propose has a phase difference alternating between ϕ_0 and ϕ_0 − δ or randomly taking the values ϕ_0 and ϕ_0 − δ depending on the value of a variable x ∈ {−1, +1}. The variable x may change before the photon enters the MZI but not during the passage of the photon through the MZI. The value of x is always known and certain. If x takes a fixed value during an experimental run then quantum theory and the event-based corpuscular model give the same interference patterns. If x is changed (randomly or systematically) and if the detection events are not grouped according to the values that x takes during the experimental run, then the results predicted by quantum theory and those produced by the event-based corpuscular model also agree. However, if x is changed and if the detection events are grouped according to the values taken by x then differences appear between the interference patterns predicted by quantum theory and those produced by the event-based model. Indeed, quantum theory predicts an interference pattern that is independent of the sequence of x-values whereas the event-based model shows a reduced visibility and a shift of the interference pattern depending on the sequence of xvalues. Because of the experimental challenges to observe changes in the interference patterns we propose a three-stage experiment: One stage with x = −1 fixed, one stage with x = +1 fixed and one stage in which x changes. We also suggest to interchange the order of the stages in order to study the reproducibility of the experimental outcomes. To head off possible misunderstandings: If a deviation from a quantum theoretical prediction is observed this

21/24

J. Phys. Soc. Jpn. Full Paper finding would not prove quantum theory wrong but instead would indicate that quantum theory does not describe the proposed experiment.

Therefore, the key question is: Which interference patterns are produced by a real laboratory experiment?

9. Acknowledgement

We thank F. Jin and K. De Raedt for discussions. This work is partially supported by NCF, the Netherlands, by a Grant-in-Aid for Scientific Research on Priority Areas, and the Next Generation Super Computer Project, Nanoscience Program from MEXT, Japan.

22/24

J. Phys. Soc. Jpn. Full Paper

References 1) M. Born and E. Wolf: Principles of Optics (Pergamon, Oxford, 1964). 2) P. Grangier, G. Roger, and A. Aspect: Europhys. Lett. 1 (1986) 173. 3) C. A. Kocher and E. D. Commins: Phys. Rev. Lett. 18 (1967) 575 . 4) J. C. Garrison and R. Y. Chiao: Quantum Optics (Oxford University Press, Oxford, 2009). 5) H. De Raedt, K. De Raedt, and K. Michielsen: Europhys. Lett. 69 (2005) 861 . 6) K. De Raedt, H. De Raedt, and K. Michielsen: Comp. Phys. Comm. 171 (2005) 19 . 7) K. Michielsen, F. Jin, and H. De Raedt: J. Comp. Theor. Nanosci. 8 (2011) 1052 . 8) V. Jacques, E. Wu, F. Grosshans, F. Treussart, P. Grangier, A. Aspect, and J.-F. Roch: Science 315 (2007) 966.

9) S. Zhao, S. Yuan, H. De Raedt, and K. Michielsen: Europhys. Lett. 82 (2008) 40004. 10) K. Michielsen, S. Yuan, S. Zhao, F. Jin, and H. De Raedt: Physica E 42 (2010) 348 . 11) P. D. D. Schwindt, P. G. Kwiat, and B.-G. Englert: Phys. Rev. A 60 (1999) 4285 . 12) F. Jin, S. Zhao, S. Yuan, H. De Raedt, and K. Michielsen: J. Comp. Theor. Nanosci. 7 (2010) 1771.

13) V. Jacques, E. Wu, T. Toury, F. Treussart, A. Aspect, P. Grangier, and J.-F. Roch: Eur. Phys. J.

D 35 (2005) 561.

14) F. Jin, S. Yuan, H. De Raedt, K. Michielsen, and S. Miyashita: J. Phys. Soc. Jpn. 79 (2010) 074401. 15) S. Zhao and H. De Raedt: J. Comp. Theor. Nanosci. 5 (2008) 490 .

16) I. N. Agafonov, M. V. Chekhova, T. S. Iskhakov, and A. N. Penin: Phys. Rev. A 77 (2008) 053801. 17) F. Jin, H. De Raedt, and K. Michielsen: Commun. Comput. Phys. 7 (2010) 813 . 18) H. De Raedt, K. De Raedt, and K. Michielsen: J. Phys. Soc. Jpn. Suppl. 76 (2005) 16 . 19) K. Michielsen, K. De Raedt, and H. De Raedt: J. Comput. Theor. Nanosci. 2 (2005) 227 . 20) A. Aspect, P. Grangier, and G. Roger: Phys. Rev. Lett. 49 (1982) 91 . 21) A. Aspect, J. Dalibard, and G. Roger: Phys. Rev. Lett. 49 (1982) 1804 . 22) G. Weihs, T. Jennewein, C. Simon, H. Weinfurther, and A. Zeilinger: Phys. Rev. Lett. 81 (1998) 5039 .

23) K. De Raedt, K. Keimpema, H. De Raedt, K. Michielsen, and S. Miyashita: Euro. Phys. J. B 53 (2006) 139 .

24) H. De Raedt, K. De Raedt, K. Michielsen, K. Keimpema, and S. Miyashita: J. Phys. Soc. Jpn. 76 (2007) 104005.

25) K. De Raedt, H. De Raedt, and K. Michielsen: Comp. Phys. Comm. 176 (2007) 642 . 26) H. De Raedt, K. De Raedt, K. Michielsen, K. Keimpema, and S. Miyashita: J. Comp. Theor.

Nanosci. 4 (2007) 957 .

27) H. De Raedt, K. Michielsen, S. Miyashita, and K. Keimpema: Euro. Phys. J. B 58 (2007) 55 . 28) S. Zhao, H. De Raedt, and K. Michielsen: Found. of Phys. 38 (2008) 322 . 29) B. Trieu, K. Michielsen, and H. De Raedt: Comp. Phys. Comm. 182 (2011) 726. 30) http://www.compphys.net/.

31) http://demonstrations.wolfram.com/EventByEventSi mulationOfTheMachZehnderInterferometer/. 32) http://demonstrations.wolfram.com/EventByEventSi mulationOfDoubleSlitExperimentsWithSinglePhoto/. 33) D. Home: Conceptual Foundations of Quantum Physics (Plenum Press, New York, 1997). 34) L. E. Ballentine: Quantum Mechanics: A Modern Development (World Scientific, Singapore, 2003).

23/24

J. Phys. Soc. Jpn. Full Paper

35) R. P. Feynman: QED - The Strange Theory of Light and Matter (Princeton University Press, 1985).

36) R. H. Hadfield: Nature Photonics 3 (2009) 696 . 37) H. Rauch and J. Summhammer: Phys. Lett. A 104A (1984) 44 .

24/24