arXiv:1011.1100v1 [astro-ph.HE] 4 Nov 2010

Optical and infrared photometry of the blazar PKS0537-441: long and short time scale variability

D. Impiombato^{1,2,3}, S. Covino^{4,5}, A. Treves^{1,8}, L. Foschini^4, E. Pian^6, G. Tosti^3, D. Fugazza^4, L. Nicastro^7, S. Ciprini^3

ABSTRACT

We present a large collection of photometric data on the Blazar PKS 0537-441 in the VRIJHK bands taken in 2004−2009. At least three flare-like episodes with months duration, and >3 mag amplitude are apparent. The spectral energy distribution is consistent with a power law, and no indication of a thermal component is found. We searched for short time scale variability, and an interesting event was identified in the J band, with a duration of ∼25 minutes.

Subject headings: galaxies: active — galaxies: BL Lacertae objects: PKS0537-441

1. Introduction

Blazars are active galactic nuclei (AGN) dominated by a relativistic jet pointing to the observer. The relativistic beaming enhances the continuum, and therefore the equivalent widths of spectral lines produced by photoionization of cold gas clouds around the nucleus may be modest, comparing with other AGN classes. In BL Lac objects, line weakness is extreme (equivalent width < 5 Å).

In order to relate dimensions and time scales in the jet comoving frame to what is directly observed, one should go through Lorentz transformations, which are characterized by the Doppler factor defined as δ = Γ^{−1}(1 − β cos θ)^{−1}, Γ is the

1Università dell’Insubria, Dipartimento di Fisica e Matematica, Via Valleggio 11, 22100 Como, Italy

2INAF, Osservatorio Astronomico di Padova, Via Vicolo dell’Osservatorio 5, 35122 Padova, Italy

3Università di Perugia, Dipartimento di Fisica e Osservatorio Astronomico, Via A. Pascoli, 06123 Perugia, Italy

4INAF, Osservatorio Astronomico di Brera, Via E. Bianchi 46, 23807 Merate (LC), Italy

5INAF/TNG Fundación Galileo Galilei - Rambla José Ana Fernández Pérez, 7, 38712, Breña Baja, TF - Spain

6INAF, Osservatorio Astronomico di Trieste, Via G. B. Tiepolo 11, 34131 Trieste, Italy

7INAF, Istituto di Astrofisica Spaziale e Fisica Cosmica, Via Gobetti 101, 40129 Bologna, Italy

8Associated to INAF and INFN.

Lorentz factor and θ is the angle of sight. When the relevant dimensions are much smaller than the spatial angular resolution, which is the usual case for the inner jet, the properties of the jet can be effectively constrained by the study of the variability of the emission (e.g. Ulrich et al. 1997).

Blazars are generally observed in a large frequency range, which, in some cases, covers the entire electromagnetic spectrum from the radio band to the TeV gamma rays (e.g. Fossati et al. 1998, Donato et al. 2001, Ghisellini et al. 2010). The basic model for explaining the spectrum of blazars is in terms of synchrotron radiation, plus an inverse-Compton (IC) component, which may be due to scattering off the electrons of the synchrotron photons, or those coming from the accretion disk, broad-line region or infrared torus. In practice, spectra are well constrained if the source size can be obtained though variability studies. The ideal situation would be to obtain the time dependence of the spectral energy distribution in the entire band of observation, and this has been done for very few objects (e.g. Hartmann et al. 2001, Ballo et al. 2002, Acciari et al. 2009, Fuhrmann et al. 2010).

The systematic study of blazar variability in the optical and infrared bands has greatly profited of the development of robotic telescopes, which ensure long observing campaigns, with relatively little intervention from the observer. The large observing time can yield information complementing that of multifrequency campaigns, which obviously can cover at most few days.

Here we report on 2004−2009 six filters photometry of the blazar PKS 0537-441, which is unprecedented for the observing time dedicated to the source. PKS 0537-441 is a z = 0.896 bright (V∼13) blazar, which was studied from radio to GeV γ rays. The main characteristics of the broad-band spectrum are the synchrotron peak in the IR, the IC hump with a maximum in the γ rays, the X-ray spectrum sampling the tail of the synchrotron and the rise of the IC, and the presence of emission lines in the optical spectrum. Therefore, the object belongs to the low-frequency peaked subclass of blazars (Pian et al. 2002, 2007).

In Section 2, we describe the observational procedures, data reduction and analysis. The results are given distinguishing between long- and shortterm variability (Sections 3 and 4). In the discussion section in particular we focus on the relevance of short time scales of variability in constraining the beaming of the source.

2. Telescope and data analysis

The Rapid Eye Mount (REM) telescope is a 60 cm fully robotic instrument located at the ESO Cerro La Silla observatory (Chile). The telescope has a Ritchey-Chretien configuration with a 60 cm f /2.2 primary and an overall f /8 focal ratio in a fast moving alt-azimuth mount providing two stable Nasmyth focal stations. At one of the two foci, the telescope simultaneously feeds, by means of a dichroic, two cameras: REMIR for the Near-InfraRed (NIR) (see Conconi et al. 2004) and ROSS (see Tosti et al. 2004) for the optical. Both the cameras have a field of view of 10^′ × 10^′ and imaging capabilities with the usual NIR (z^′, J, H, and K) and Johnson-Cousins VRI filters. The telescope was originally designed for follow-up of Swift gamma-ray bursts, but for most of the time it is used for standard observational programs. More information about the REM project and capabilities can be found in Zerbi et al. (2001), Chincarini et al. (2003), Covino et al. (2004).

Both REMIR and ROSS instruments were used in order to obtain nearly simultaneous data and to study the spectral behavior of PKS0537-441 at different levels of flux. The REM telescope has systematically observed this source for 5 years between December 2004 and March 2009.

Data analysis has been carried out following standard recipes. Instrumental magnitudes were obtained via aperture photometry by means of an automatic pipeline^1 which aligns and rotates frames to a common reference, derives and calibrates photometry comparing to standard stars in the field from the 2MASS catalogue^2 in the NIR and from sequences reported by Hamuy & Maza (1989) in the optical. Results were controlled manually using the Graphical Astronomy and Image Analysis (GAIA)^3 tool: we selected only frames with reliable photometry and absolute calibration based on the presence of the calibration stars, on their consistency, stable background, correct centering, etc. In particular, for all frames, we required that at least three out four calibration stars were detected. The reference stars, the same in the optical and in the NIR, are stars Nr. 1, 2, 3 and 6 as labeled in Hamuy & Maza (1989) corresponding to the 2MASS stars 05390451 − 4406382, 05384933 − 4401300, 05385997 − 4401191 and 05383780 − 4403241, respectively. The agreement between the automatic pipeline and the manual analysis is typically better than 10% in flux.

In the following, fluxes are corrected with A_V = 0.18 (Kalberla et al. 2005) and the extinction laws of Cardelli et al. (1989), while magnitudes are the observed ones. The quoted errors are at 1σ and they include photometric and calibration uncertainties.

3. Long time scale variability

Fig. 1 represents the light curves of the source in the six bands. Part of these data was already published in Dolcini et al. (2005), Pian et al. (2007), Impiombato et al. (2008). Pucella et al. (2010) consider some photometry of the source in October 2008 coincident with an AGILE γ−ray observation. The 2006 data, which are noticeable for the large and complex variability, are reported in an enlarged version in Fig. 2. For all photo-

1http://www.merate.mi.astro.it/utenti/covino/usermanual.html 2http://irsa.ipac.caltech.edu 3http://star-www.dur.ac.uk/∼pdraper/gaia/gaia.html

Fig. 1.— Optical and NIR light curves of PKS0537-441 in the 2004−2009.

metric points (see Table 1), we give the filter, the reference MJD at the beginning of the exposure, the integration time, the magnitude, and the corresponding error. The typical integration times are 20−600 s in the optical and 170 s in infrared bands.

The maximum and minimum states are reported for each filter in Table 2. The values have been controlled through the manual analysis and are in good agreement with the automatic analysis ones. The variability ranges from ∼ 4 mag in V to ∼ 6 mag in J. Note that the time coverages in the various filters are not equal.

4. Short time scale variability

Since the typical exposure duration is 20−600 seconds, variability on a few minute time scale can be searched for. However, our observing campaigns were not optimized for the study of such variability and, in fact, there are relatively few epochs where 5−10 points within an hour are available. Moreover, the observing procedure favours filter shifts after few photometric points. Nonetheless, we have considered the usual definition of an exponential increase/decrease of flux:

F (t) = F (t_0) exp[−(t − t_0)/τ] (1)

where F (t) and F (t_0) are the fluxes at the time t and t_0, respectively, and τ is the characteristic time scale. The time scale τ intrinsic to the source is then calculated as τ_{int} = τ/(1 + z).

We considered only frames with reliable photometry basing on consistency among the various reference stars (at least three) and no image defects close to the target position. An automatic procedure was launched in order to find events of minimal time scale, τ (< 1 hour), with flux differences with a significance above 5σ. One event was recovered, which appear of interest. It is reported in Table 3: all the frames were carefully checked manually. No simultaneous events satisfying our criteria were detected in the optical bands. Note that the telescope is designed to provide the best sensitivity in the NIR.

5. Discussion

The light curves of 2004−2009 (Figs. 1 and 2) correspond to rather irregular exposures and are interrupted by large gaps, partly due to the visibility conditions of the source. Nonetheless, this is the largest collection of published data on PKS 0537-441 in terms of overall exposure (t ∼ 3 × 10^5 s) and number of photometric points in all bands (about 4000 points).

A visual inspection of Figs. 1 and 2 indicates very structured light curves, with grossly similar shapes in all bands. A number of rapid brightenings and fadings, which may suggest flare like episodes, are apparent. Typical durations are months and the amplitudes are of several magnitudes (see also Table 2). The event described by Dolcini et al. (2005) and Pian et al. (2007) is that of Jan 2005 (days 41−71 in VRI bands, see Fig. 1). That of February−March 2008 (days 1189−1216 in VRIJHK bands, see Fig. 1) is the one considered by Impiombato et al. (2008). A double flare structure is present in the period 21/02/2006−31/12/2006 (see Fig. 2). Probably the event of 1971, reported by Eggen (1973), 4 mag in V in 8 months, is analogous to those examined here.

We compared the spectral shapes at three epochs where all six filters are available and the intensity states are significantly different. An interesting case is shown in Fig. 3, where it is apparent that the SED can be satisfactorily described by power laws. It is noticeable that the higher and lower states, which are separated by two weeks, exhibit an intensity variation by a factor ∼ 10 and the spectral index changed only slightly (Δα ∼ 0.1). Therefore, in both the low and high state the emission appears dominated by the jet, and no evidence of a thermal component is apparent. Some deviations from a power law may appear in the low-state 2004 December 21 (Fig. 3 of Dolcini et al. 2005). The thermal component mentioned by Pian et al. (2007) is probably a consequence of the extreme variability of the source.

We now concentrate on the short time scale variability, and in particular on the event of 2006 October 30 (MJD 54038). This is rather rapid: comparable to what observed by Villata et al. (2008) in the notorious highly variable BL Lac object S5 0716+714, about 0.002 mag/min in V. A time scale τ_{int} ∼ 25 min corresponds to a size in the source frame R^′ < cτ_{int} ∼ 4 × 10^{14} cm, having considered δ ∼ 10, typical of blazars (e.g.

Fig. 2.— Optical and NIR light curves of PKS0537-441 in the year 2006.

Fig. 3.— Spectral flux distribution at three epochs. Fluxes F_ν are in mJy, frequency ν in Hz.

Ghisellini et al 2010, and references therein). This can be compared with other constraints on the size of the source. Indeed, as shown in Table 4 of Pian et al. (2005), the mass estimates of PKS 0537-441 range from 0.5 × 10^8M_⊙ to 16 × 10^8M_⊙. They are based on the measurements of line widths and the continuum intensity, which enable one to deduce the velocity of the clouds emitting the broad lines and their distance. The mass then follows from the virial theorem. The problem is that the continuum is dominated by the jet and one should use relativistically corrected values. Such a correction is introduced, but in a somewhat gross formulation, only by Pian et al. (2005), who favors the lowest value of mass. The gravitational radius R_g = GM/c^2 for masses in the 10^{8−9}M_⊙ is 1.5 × 10^{13−14} cm. Taking a jet basis at 6 gravitational radii one has typical dimensions in the range 2 × 10^{14−15} cm. These results confirm that the blazar duty cycle is able of extremely rapid changes in flux both at γ rays and optical frequencies and can have strong impact in the evaluation of the cosmic high-energy background (Giommi et al. 2006, Draper & Ballantyne 2009).

Variability on time scale of minutes in the optical band appears a rather accessible probe of the relativistic jet structure. In future observations of PKS 0537-441 and similar sources one should take into account that rapid variability of the type reported here appears a rare event and therefore very long monitoring should be scheduled. An important improvement with respect to our photometry would be the actual simultaneity in all bands, which can be obtained by beam splitting, since one could probe the color of the short events.

REFERENCES

Acciari, V.A., Aliu, E., Arlen, T., et al., 2009, Science, 325, 444

Ballo, L., Maraschi, L., Tavecchio, F., et al., 2002, ApJ, 567, 50

Cardelli J.A., Clayton G.C., Mathis J.S., 1989, ApJ, 345, 245

Chincarini, G., et al., 2003, The Messenger, 113, 40 Conconi, P., et al. 2004, Proc. SPIE, 5492, 1602

Covino, S., et al. 2004, Proc. SPIE, 5492, 1613

Dolcini, A. et al. 2005, A&A,443, L33

Donato, D., Ghisellini, G., Tagliaferri, G. & Fossati, G., 2001, A&A, 375, 739

Draper A.R. & Ballantyne D.R., 2009, ApJ, 707, 778 Eggen, O. J., 1973, ApJ, 186, 1

Fossati, G., Maraschi, L., Celotti, A., Comastri, A. & Ghisellini, G., 1998, MNRAS, 299, 433

Fuhrmann L. et al. 2010, Fermi meets Jansky - AGN in Radio and Gamma-Rays, Ed(s). Savolainen T., Ros. E., Porcas R.W., & Zensus J.A., June 21-23, 2010, Bonn, Germany.

Hamuy, M. & Maza, J. 1989 AJ, 97, 720

Hartman, R.C., Böttcher, M., Aldering, G., et al., 2001, ApJ, 553, 683

Kalberla P.M.W., Burton W.B., Hartmann D., et al., 2005, A&A, 440, 775

Ghisellini, G., Tavecchio, F., Foschini, L., Ghirlanda, G., Maraschi, L. & Celotti, A., 2010, MNRAS, 402, 497

Giommi P., Colafrancesco S., Cavazzuti E., Perri M., Pittori C., 2006, A&A, 445, 843

Impiombato, D., Tosti, G., Treves, A., Covino, S., Pian, E., Ciprini, S., 2008, In: Proceedings of the Workshop on Blazar Variability across the Electromagnetic Spectrum, POS(BLAZARS2008), 043

Pian, E. et al. 2002, A&A, 392, 407-415

Pian, E., Falomo, R., Treves, A. 2005, MNRAS, 361, 919

Pian, E., Romano,P., Treves, A. et al. 2007, ApJ, 664, 106

Pucella G. et al. 2010, A&A , in press (http://www.aanda.org/articles/aa/pdf/forth/aa14953-10.pdf)

Tosti, G. et al. 2004, Proc. SPIE, 5492, 689

Ulrich, M., Maraschi, L., Urry, C.M., 1997, ARA&A, 35, 445

Villata, M., et al., 2008, A&A, 481, L79

Zerbi, F.M., Chincarini, G., Ghisellini, G. et al.

2001, AN, 322, 275

This 2-column preprint was prepared with the AAS L^ATEX macros v5.2.

Table 1: Example of photometry of PKS0537-441 from December 2004 to March 2009. The full version of the table is available online.

MJD Exposure Filter Magnitude Error d s mag mag 53357.17192 600 V 16.20 0.08 55326.98610 300 V 14.02 0.11 ... ... ... ... ...

53360.16350 30 R 14.93 0.15 55327.01266 300 R 13.88 0.03 ... ... ... ... ...

53358.18466 600 I 15.28 0.02 55327.01645 300 I 13.43 0.06 ... ... ... ... ...

53676.17050 30 J 13.04 0.05 55326.99834 30 J 12.37 0.03 ... ... ... ... ...

53677.29373 30 H 12.62 0.26 55327.01354 30 H 11.61 0.05 ... ... ... ... ...

53453.02882 30 K 10.71 0.04 55312.04763 30 K 10.59 0.05 ... ... ... ... ...

Table 2: Maximum and minimum intensity state of PKS0537-441. MJD filter Magnitude Flux(mJy) ΔMagnitude 55255.22365 V 12.95±0.09 24.1 ± 2.0 53677.29965 V 16.87±0.25 0.65 ± 0.15 V 3.919±0.266 55292.11168 R 12.08±0.07 42.1 ± 2.6 53726.23140 R 16.80±0.22 0.55 ± 0.11 R 4.716 ±0.233 53406.11486 I 12.00±0.08 35.8 ± 2.5 53726.35053 I 16.37±0.24 0.64 ± 0.14 I 4.37 ±0.254 55271.07350 J 10.78±0.12 77.5 ± 8.9 53834.98987 J 17.78±0.25 0.12 ± 0.03 J 6.998 ±0.274 54063.13561 H 10.86±0.03 46.3 ± 1.4 53835.04113 H 15.99±0.05 0.41 ± 0.02 H 5.129 ±0.062 54063.14019 K 10.04±0.03 64.5 ± 1.6 53835.01757 K 15.37±0.06 0.47 ± 0.03 K 5.334 ±0.068

Table 3: A short event.

MJD Filter Flux ΔT τ_{int} Significance mJy min min σ 54038.29736 J 7.22±0.09 54038.29944 J 7.69±0.06 J 3 25.2±0.3 5.4