arXiv:1105.4077v2 [hep-ph] 30 Jan 2013

CERN-PH-TH/2011-118, EURONU-WP6-11-35, IFIC/11-24, MPP-2011-56

Neutrino Probes of the Nature of Light Dark Matter

Sanjib Kumar Agarwalla,^{1, ∗} Mattias Blennow,^{2, †} Enrique Fernandez Martinez,^{3, ‡} and Olga Mena^{1, §} 1Instituto de Física Corpuscular, CSIC-Universitat de València, Apartado de Correos 22085, E-46071 Valencia, Spain 2Max-Planck-Institut für Physik (Werner-Heisenberg-Institut), Föhringer Ring 6, 80805 München, Germany 3CERN Physics Department, Theory Division CH-1211 Geneva 23, Switzerland

Abstract

Dark matter particles gravitationally trapped inside the Sun may annihilate into Standard Model particles, producing a flux of neutrinos. The prospects of detecting these neutrinos in future multi-kt neutrino detectors designed for other physics searches are explored here. We study the capabilities of a 34/100 kt liquid argon detector and a 100 kt magnetized iron calorimeter detector. These detectors are expected to determine the energy and the direction of the incoming neutrino with unprecedented precision allowing for tests of the dark matter nature at very low dark matter masses, in the range of 10 − 25 GeV. By suppressing the atmospheric background with angular cuts, these techniques would be sensitive to dark matter - nucleon spin-dependent cross sections at the fb level, reaching down to a few ab for the most favorable annihilation channels and detector technology.

∗Sanjib.Agarwalla@ific.uv.es †blennow@mppmu.mpg.de ‡enfmarti@cern.ch §omena@ific.uv.es

I. INTRODUCTION

A plethora of cosmological and astrophysical measurements over the last decades has tested the validity of the Standard Model of Big Bang cosmology (a spatially flat Friedman– Robertson–Walker model) at an unprecedented level of precision. Current observations point to a flat universe in which the mass-energy content includes only 5 % of ordinary matter (baryons) while 22 % is a mysterious non-baryonic dark matter (DM) component, whose properties are largely unknown. If it can be identified with some relic, this should be a massive, neutral and sufficiently long-lived particle. A popular hypothesis, realized in many extensions of the Standard Model of particle physics (SM), including supersymmetry [1] or extra dimensional models [2, 3], is that the DM is dominated by a single species of weakly interacting massive particle (WIMP). Such WIMPs could have masses ranging from several GeV to dozens of TeV, see Ref. [4] for a review. Direct DM searches look for the recoil energy of target nuclei due to interactions with the DM particles. WIMP scattering on nuclei may happen via spin-dependent interactions (proportional to J(J + 1), rather than to the number of nucleons) or via spin-independent scattering (which grow with A^2 and therefore increase dramatically with the mass of the target nuclei). The spin-independent cross section dominates over spin-dependent scattering in current direct DM detection experiments, which use heavy atoms as targets, setting therefore very strong constraints on spin-independent interactions. For DM capture in the Sun, however, the distinction is not so strong as in direct detection searches since a large fraction of the Sun’s mass is in the form of hydrogen, for which there is no enhancement of the spin-independent cross section. In the following, we will present our results in terms of spin-dependent DM scattering cross section. However, in practice, similar neutrino fluxes would be obtained with spin-independent cross section around two orders of magnitude smaller due to its enhancement for the heavier nuclei present in the Sun (see, e.g., Ref. [5]). Thus, all the results presented here for spin-dependent scattering cross sections can be roughly translated for the spin-independent case with an improvement of around two orders of magnitude.

Although there is no confirmed observation of the passage of WIMPs through a detector, a long standing positive signal in the form of an annual modulation has been reported by the DM search experiment DAMA/LIBRA [6]. This annual modulation is expected in the scattering of DM particles off nuclei in the detector due to the Earth’s annual motion around the Sun, that modifies the relative velocity of the Earth and the DM halo. The DAMA/LIBRA collaboration has reported the observation of 13 such cycles, compatible with the expected phase due to the Earth’s orbit, at 8.9σ. This observation is, however, not confirmed by other direct search experiments, such as Xenon [7, 8] and CDMS [9]. Tension between the two datasets remains even when interpreting the DAMA/LIBRA results as scatterings of DM particles off the Na nuclei^1, which would point to light DM masses ∼ 10 GeV with a spin-independent scattering cross section σ ∼ 0.2 fb close to the threshold of the Xenon and CDMS sensitivities. On the other hand, the CoGeNT experiment has also reported an observed excess of events over the expected background [10]. As in the DAMA/LIBRA case, the shape of the excess would also be consistent with scatterings of light DM ∼ 10 GeV, although with somewhat smaller spin-independent scattering cross section σ ≲ 0.1 fb. The similarity of the DAMA/LIBRA and CoGeNT results is very intriguing, although there is some tension between the preferred value of the cross section and there is controversy on whether the two DM hints can be reconciled in the simple spin-independent elastic scattering picture, with analyses pointing to a combined allowed region around ∼ 7 GeV and σ ∼ 0.2 fb [11] or disfavouring such an explanation [12]. Even more tantalizing is the recent announcement of the CoGeNT collaboration of an annual modulation, similar to the DAMA/LIBRA one, in their observed excess at 2.8σ [13]. Furthermore, the CRESST-II experiment also observes an excess of 32 events to be compared with an expect background of 8.4 ± 1.4 in the O band [14], corresponding to the lowest energies. When interpreted as a DM hint, these events could be accommodated with a mass and cross section in the same region as that favoured by DAMA/LIBRA and CoGeNT [12]. While the accumulation of hints favouring light DM with masses of ∼ 10 GeV and a spin-independent cross section σ ∼ 0.1 fb is tantalizing, this region is disfavoured by the null results of the Xenon and CDMS searches. However, as this region is close to the energy threshold, these results are sometimes questioned since small changes in the energy calibration or efficiencies could indeed reopen the window required for the DM interpretation of DAMA/LIBRA, CoGeNT and CRESST. On the other hand, the Xenon and CDMS experiments have a cleaner signal region, given the stronger background suppression achieved. Therefore, the DAMA and CoGeNT excesses

1 The DAMA detector exploits very pure sodium iodide crystals and DM scatterings off the I nuclei would instead point to heavier DM masses.

could be due to a misinterpreted background component. A very similar situation occurs when interpreting the DAMA/LIBRA signal through a spin-dependent cross section in the pb range and the null results of the PICASSO [15], COUPP [16] and SIMPLE [17] searches.

Clearly, more experiments sensitive to these low DM mass regions are needed in order to settle the present tensions and shed light on the DM puzzle. In this context, DM indirect detection methods offer a very attractive complementary probe. They aim to detect the gamma-ray, positron, anti-proton and neutrino fluxes produced in DM annihilations in regions with dense DM accumulations, such as the Galactic center. In the case of neutrinos, the higher densities of DM expected to be gravitationally trapped in celestial bodies, such as the Sun [18, 19] or the Earth [20, 21] offer a very appealing alternative since, contrary to positrons or gamma-rays, neutrinos can escape the solar interior providing a snapshot of the interaction taking place. These indirect searches, provide a very complementary tool to direct detection probes since, unlike them, they will not only provide a measurement of the DM mass and scattering cross section, but also information on the different annihilation branching ratios, depending on the particular channel searched for. Bounds on the WIMP mass and cross section from the water Cerenkov (WC) neutrino detector Super-Kamiokande (Super-K) have been obtained for different annihilation channels, see Ref. [5, 22, 23]. A lot of effort has also been devoted to using neutrino telescopes to detect neutrinos from DM annihilation processes [24–29]. However, these neutrino telescopes are mostly sensitive to ν_μ and ν̄_μ events, and their energy threshold is ∼ 5 − 10 GeV in the muon energy (which is translated into ∼ 15 − 20 GeV neutrino energy). Other neutrino detectors might be necessary to test the DM mass region indicated by DAMA/LIBRA and CoGENT via indirect searches. Even if Super-K is sensitive to low DM masses, the energy resolution achieved by the former detector is not as good as for some future facilities. Future neutrino detectors, such as WC, liquid argon (LAr), liquid scintillator, or magnetized iron neutrino detector (MIND) facilities, might be constructed for other physics measurements (such as neutrino oscillation studies or core collapse supernova neutrino physics) and could be exploited for indirect DM detection.

As first proposed in Ref. [30], future MIND-like detectors currently under development, such as India-based Neutrino Observatory (INO), could provide an excellent energy and angular resolution to neutrinos from WIMP annihilations in the Sun. In such detectors, the expected degeneracies among the DM mass, annihilation branching ratios, and elastic cross section with nuclei could be resolved, shedding much light on the DM nature. Other detection techniques originally proposed and constructed for long baseline and supernova neutrino studies have also been examined in this context, such as future LAr detectors [31] as well as current and future liquid scintillator detectors [32].

Here we extend the work of Ref. [30] by considering both lower DM masses (∼ 10 GeV) and additional annihilation channels to the bb̄ and τ^−τ^+ previously studied. We also consider not only future MIND detectors, but also proposed future LAr facilities, such as GLACIER. Both techniques are expected to achieve unprecedented energy and angular reconstruction capabilities at ∼ GeV neutrino energies.

The structure of this paper is as follows: Section II describes the MIND and LAr detector technologies exploited here. The neutrino fluxes and event rates from WIMP annihilations in the Sun, as well as backgrounds to our signal from atmospheric neutrino events in these two detector facilities are presented in Sec. III. In Sec. IV, we present the DM nature reconstruction exercise performed here by means of a Markov Chain Monte Carlo (MCMC) analysis for several light DM particle masses. We summarize and draw our conclusions in Sec. V.

II. LARGE NEUTRINO DETECTORS

Large underground neutrino detectors [33–39] have been very successful in observing neutrinos from several natural and artificial sources and have provided one of the few evidences we have of physics beyond the SM, as well fundamental results in astrophysics [40, 41]. Active research is underway worldwide to plan and build the next-generation of large underground neutrino detectors in the mass range of 10^2 to 10^3 kt [42–48], which will play a crucial role in the upcoming era of precision neutrino science. The physics potential of such large detectors is extremely broad. One of the major aims is the search for proton decay [49], which provides a direct test of Grand Unified Theories. These large neutrino detectors are also essential for the future accelerator based long baseline neutrino oscillation experiments to explore mixing and CP violation in the lepton sector [50–52]. Applications in astrophysics include precise measurements of supernova neutrinos and the search for new sources of astrophysical neutrinos [43, 53]. In this context, the possibility of observing the neutrinos originated from the annihilation of DM particles in the center of the Sun [22, 30, 31, 44]

FIG. I: The angular resolutions for LArTPC and MIND considered in this study as a function of the true neutrino energy. These curves have been derived from [31, 54, 55].

and to reconstruct the annihilation process so as to probe the nature of DM is particularly tantalizing and will be the main goal of our study. These detectors are expected to measure the energy and the direction of the initial neutrino with very high precision which allows to search for DM particles in the mass range of 5 − 50 GeV, which cannot be probed effectively with large neutrino telescopes such as IceCube [28].

Currently, four different technologies for large underground neutrino detection are being investigated worldwide: WC, unsegmented liquid scintillator, LAr time projection chamber (LArTPC), and MIND. Below we discuss in detail the LArTPC and MIND alternatives, which can provide the best performance for the searches under study. Indeed, the energy and angular resolution capabilities of WC and liquid scintillator detectors degrade rapidly beyond the quasielastic regime and thus makes them unsuited for the multi-GeV energies under consideration. The assumed characteristics of the detectors used in our numeric simulations are summarized in Tab. I.

Detector characteristics

MIND LArTPC (Only μ^±) (Both μ^± & e^±) Fiducial mass 100 kt 34/100 kt ν energy threshold 2 GeV 2 GeV Detection efficiency (ϵ) Fig. 6.21 (Top Panels) 100 % for μ^± of Ref. [54] 80 % for e^± ν energy resolution (δE) 0.15E 0.15 √ E/1 GeV GeV ν angular resolution (δθ) See Fig. I See Fig. I Bin size 1 GeV 1 GeV TABLE I: Detector characteristics used in our simulations.

A. Liquid Argon Time Projection Chamber

A LArTPC [56] is a modern version of the bubble chamber technology. The working principle of LArTPC is that by applying an electric field in highly pure argon, free electrons created by the passage of an ionizing particle can be drifted over large distances, O(m), without any distortion. This enables the possibility to obtain the three dimensional image of the particle track by just reading out the surface of the volume. The projections of the track can be used to reconstruct the three dimensional path of the particle with an accuracy of a few mm. The viability of the LArTPC technology has been tested by the extensive R&D program, developed by the ICARUS collaboration. Currently, the largest LArTPC ever built, is the ICARUS T600 module [57–59] with a mass of 600 t. Based on this technique, a very massive next-generation 100 kt detector (GLACIER) [43, 48, 60] has been proposed under LAGUNA [61]. The LBNE physics program in United States is also considering a 34 kt LArTPC as a possible detector candidate for DUSEL [51, 62]. In this work, we study the prospects of a 34/100 kt LArTPC detector to search for DM WIMPs with 10 full years of data taking.

Since this technology is still in its R&D phase, many uncertainties regarding its performance at very large mass scale exist. Thus, the detector characteristics that we consider here, are essentially based on the performance of the ICARUS T600 detector [57–59] and on the ongoing estimates of the LAGUNA [61] and LBNE [62, 63] collaborations.

In a LArTPC, the muon-electron misidentification probability is almost zero and it offers very high detection efficiency for muons and electrons in the GeV energy range, suppressing the neutral current π^0 backgrounds. In our study, we consider ν_e, ν̄_e, ν_μ, and ν̄_μ charged current (CC) events with a neutrino energy threshold of 2 GeV. In principle, the technology can be extended down to 500 MeV, but these low energies are highly populated with atmospheric backgrounds. The highest DM mass that we consider in this study is 25 GeV and in this energy range one can expect that the muons and electrons produced via CC processes will be fully contained in these massive detectors. We assume an 80 % detection efficiency for electrons and positrons and for μ^± we consider a full 100 %. Electron tracks would remain fully contained up to very high energies enabling to probe DM masses up to 100 GeV. Since magnetization of this detector would be challenging, the charge of the particle is not measured and we combine the e^− and e^+ as well as the μ^− and μ^+ samples. We assume an energy resolution of δE(E) = 0.15 √ E/1 GeV GeV for CC μ^± and e^± events.

The atmospheric neutrino background can be suppressed to a very low level by selecting a narrow sky window of the size of the angular resolution of the detector centered around the Sun. The reconstruction of the incoming neutrino direction in a LAr detector has been estimated using the information coming from all the final state particles and the detector angular resolution as a function of incident neutrino energy has been shown in Fig. I. This information has been obtained from Fig. 4 of [31]. Notice that by using information on both the leptonic and hadronic final states of the interaction, angular resolutions smaller than the typical scattering angle between the neutrino and the charged lepton can be achieved, something impossible if only the outgoing charged lepton is detected. We use the same angular resolution to estimate the atmospheric neutrino backgrounds for ν_e/ν̄_e and ν_μ/ν̄_μ CC signal events.

B. Magnetized Iron Calorimeter detector

Iron calorimeters are made up of iron (steel) modules interspersed with sensitive elements in which charged particles deposit energy. Electrons and positrons cannot pass through iron and therefore these detectors are blind to ν_e/ν̄_e. This type of detectors is well suited to observe the long muon tracks and hence are capable of observing only ν_μ and ν̄_μ events. A magnetic field can be added to these detectors to distinguish ν_μ events from ν̄_μ. A

Magnetized Iron Neutrino Detector (MIND) [64, 65] of large mass (50 - 100 kt) has been proposed for the precision study of neutrino oscillations of neutrinos from muon decays at a future neutrino factory facility [52, 66–69]. A similar type of detector is being considered for the INO facility [70, 71] which is planned to have a total mass of 50 kt at startup, which might be later upgraded to 100 kt. The main aim of this detector is to measure atmospheric neutrinos [46] and it may serve as a neutrino factory far detector at later stage [72].

In our study, we consider a 100 kt MIND detector with an energy dependent efficiency as given in Ref. [54]. For ν_μ, it remains almost flat (∼ 63%) in the neutrino energy range of 10 to 25 GeV while for ν̄_μ, it deteriorates from 76% to 71% going from 10 to 25 GeV. This detector can provide accurate measurements of the muon energy [54]. Moreover, due to the calorimetric nature of the detector, the energy of the hadronic shower can also be reconstructed [73, 74] which helps to reconstruct the energy of the interacting neutrino. We use an energy resolution of δE(E) = 0.15E for CC μ^± events. The angular resolution of this detector is also quite good and mainly governed by the hadronic shower [55]. We use the information from both muons and hadronic showers [54, 55] to reconstruct the incoming neutrino direction. The neutrino angular resolution of this detector as a function of true neutrino energy has been depicted in Fig. I. The angular resolution for ν_μ is slightly better than ν̄_μ. We use this information on angular resolution to suppress the atmospheric ν_μ and ν̄_μ backgrounds in a similar way to the one discussed above for the LArTPC, i.e. by discarding all events except those reconstructed within the solid angle subtended by the neutrino angular resolution centered around the Sun. Notice that the efficiency as well as the energy and angular resolutions of the MIND detector will depend on the number of active layers the track crosses and, therefore, on the direction of the incoming neutrino. While for a neutrino beam experiment the detector can be oriented along this direction this would be more challenging for neutrinos from the Sun. We have neglected this dependence in this first study since it will critically depend on the unknown orientation and latitude of the detector.

III. NEUTRINO FLUXES AND EVENT RATES

If DM particles can pair annihilate we can envision a wide variety of possible channels into lighter SM components. The rates for these annihilations will be greatly enhanced in regions with larger density of DM particles. If the cross section between DM and nuclei is high enough, the collisions of DM with solar matter will allow them to lose energy and become gravitationally bound, accumulating in the solar gravitational potential. Thus, we can expect a larger number of DM annihilations in the Sun than in the surrounding space. Most of the annihilation products will be lost in scatterings and decays in the dense solar interior. Fortunately, neutrinos once again provide us with a unique tool to explore these secretive processes that could take place in the interior of the Sun. Indeed, neutrinos from DM annihilations could escape the solar medium unaffected and provide a picture of the processes taking place in the star’s interior. If these neutrinos have energies in excess of GeV they will be clearly distinguishable from the MeV neutrinos produced in solar reactions.

Many of the possible DM annihilation channels could indeed lead to such neutrino signals [75]. Assuming that DM annihilations are flavour conserving and predominantly to two body final states, the bb̄, cc̄, τ^−τ^+ or ν_αν̄_α channels would lead to the required high energy neutrino probes of solar DM annihilations. For high enough DM masses, additional channels leading to high energy neutrino fluxes would also become kinematically allowed such as tt̄, W^+W^−, ZZ or even Higgs production. The energies of these neutrinos would make them unsuitable for the detector technologies under study and more adequate for large neutrino telescopes, since the associated charged leptons will not be fully contained in a small detector volume and the energy and angular resolution would be greatly degraded. We will therefore limit our study to DM masses up to 25 GeV. Other possible channels such as e^−e^+ or γγ would not lead to neutrino signals but could provide complementary probes in gamma ray or positron searches.

The expected neutrino fluxes per annihilation at the detector from the different DM annihilation channels have been obtained using the WimpSim [76] software. The fluxes for the “standard oscillations” with θ_{13} = 0^∘, θ_{23} = 45^∘, θ_{12} = 33.2^∘, Δm^2_{31} = 2.2 · 10^{−3} eV^2 and Δm^2_1 = 8.1 · 10^{−5} eV^2 were used. These fluxes must later be normalized with the annihilation rate in the Sun. In equilibrium this annihilation rate is one half of the capture rate, which is proportional to the DM-nucleon cross section and can be computed given the solar density profile, for which we used the standard BP2000 Solar Model [77], a local DM density of ρ_{DM} = 0.3 GeV cm^{−3}, and a Maxwellian velocity distribution shifted by the solar velocity v_⊙ = 220 km s^{−1}. For the computation of the capture rate we follow [1, 78]. Notice that large systematic astrophysical uncertainties affect the computation of the

FIG. II: Expected muon events in bins of 1 GeV width for the MIND (left) and GLACIER (right) 100 kt detectors and for neutrinos from the annihilation of DM particles of 10 GeV (up) and 25 GeV (down) mass. Ten full years of data taking for a 1 fb DM-nucleon spin-dependent cross section have been assumed. Since GLACIER has no charge identification both μ^+ and μ^− events where added, while only μ^− events are displayed for MIND.

capture rate and thus the overall normalization of the expected signal. We will not include this systematic error in the numerical results presented in Sec. IV since their effect in the sensitivity to the annihilation cross section to the different channels is just a trivial rescaling by the corresponding amount. These fluxes were later convoluted with the cross section and detector efficiencies and energy resolutions summarized in Tab. I in order to obtain the expected number of event rates depicted in Fig. II. The event rates have been computed for 10 full years of data taking with a DM flux computed assuming a 1 fb cross section between DM and nucleons. For each channel a 100 % branching ratio is shown. For the MIND detector the muon neutrino events arising from the different annihilation channels are depicted. Since

MIND is a magnetized detector, muon antineutrinos can also be distinguished. The event rates for antineutrinos are very similar in shape but slightly lower than the neutrino ones, so we do not reproduce them again in a separate figure but will include them in the numerical analysis presented in Sec. IV. On the other hand, GLACIER is not magnetized and neutrino and antineutrino events need to be summed. However, GLACIER is also suited to detect electron neutrino events. In Fig. II we show the muon neutrino and antineutrino events for the GLACIER detector. Electron events have a similar shape and we do not show them but they are also included in the analysis of Sec. IV. As expected, the annihilation channels that lead to larger neutrino fluxes at the detector are the neutrino channels, with the hardest spectrum; the τ channel with an intermediate spectrum; and the heavy quark channels (b and c) with a softer spectrum and somewhat smaller flux. The gluon channel (g), while also leading to neutrinos, provides an event rate too low to be observed and will be disregarded.

Notice that all the neutrino channels provide a very similar spectrum (since the kinematics of the process is identical) and, moreover, neutrino oscillations ensure that almost equal amounts of all neutrino flavours will arrive at the detector. The ν_μ and ν_τ channels are indeed indistinguishable (since θ_{23} was set to maximal mixing), and the ν_e annihilation channel only shows some deviation at low energies where the event rate is too low to be observed. Thus, when trying to reconstruct the DM annihilation channels in Sec. IV we will not distinguish between the different flavours but only consider a generic “neutrino channel” for which the ν_μ case was chosen. Similarly, the annihilations into b and c quarks provide very similar spectra. As will be shown with a particular example in Sec. IV, the detector energy resolution is not enough to discriminate between these two channels and an effective “quark channel” q will be considered instead, for which the b case was chosen as representative.

A common feature of all the channels is that the corresponding event rates will have an abrupt cutoff at the energy corresponding to the DM mass, providing a clean and unambiguous measurement of this parameter. This will be true as long as either the τ or neutrino signal is measured, given their harder spectrum. Thus, in the analysis of Sec. IV the DM mass will be fixed, since it is not degenerate with any other parameter. The free parameters that we will try to reconstruct will be the product of the DM-nucleon cross section times the branching ratio of DM annihilations to neutrinos, τ and heavy quarks.

A. Atmospheric Neutrino Background

The main source of background for the search of neutrinos from DM annihilations in the Sun will be the atmospheric neutrino events at the detector. Indeed, unlike solar neutrinos, the atmospheric neutrino energy range overlaps with that of the signal. This is an unavoidable and potentially large background which can fortunately be reduced by exploiting the extremely good angular and energy resolution of the detectors under consideration. Indeed, while the signal neutrinos come from the direction of the Sun, the atmospheric neutrinos reach the detector from all directions and can be significantly reduced by accepting only the background events for which the reconstructed incoming neutrino direction corresponds with the solar position at the time of the event.

In order to simulate the atmospheric neutrino background we take as representative fluxes those from Ref. [79] for the Frejus site with mountain over detector at a solar maximum. These fluxes are then oscillated with the same oscillation parameters as the DM signal and convoluted with the cross section, detector efficiency and energy resolutions summarized in Tab. I. In order to estimate the background suppression achieved by the angular cut around the solar position, we first estimate the number of atmospheric events for a given energy integrating over the whole sky and then multiply the number of events by the solid angle subtended by a cone of the detector angular resolution at the corresponding energy divided by 4π. Of course this is only an approximation and the atmospheric flux should only be integrated over the position of the Sun at a particular time. However, since this will depend on what is the actual geographical site selected for the detector, we regard this average over all the sky as a good approximation of the magnitude of the atmospheric neutrino background. We have considered only CC events in estimating the atmospheric neutrino background and in the numerical analysis we add a 10 % systematic uncertainty (fully correlated in all the energy bins) to this background. The contribution from neutral current (NC) events is negligible for both electron and muon samples due to the high background rejection capability (> 99.5 %) of the detectors under consideration. The atmospheric ν_τ /ν̄_τ fluxes produced via neutrino oscillations can give rise to tau leptons through CC interactions inside the detector. These taus can decay further into electrons and muons with a branching ratio of ∼ 17 %. We have checked that these backgrounds are negligible.

The black dashed lines in Fig. II depict the estimated atmospheric neutrino background for each detector after the angular cut. As can be seen, the background decreases fast with the neutrino energy and mainly affects the observability of the quark annihilation channels. Indeed, we have checked that increasing the background mainly affects the sensitivity to this channel, while the neutrino and τ ones remain essentially unaffected.

IV. RECONSTRUCTING THE DARK MATTER ANNIHILATION BRANCHING RATIOS

As motivated in the previous section, we will scan and analyze the parameter space consisting of BR_xσ (x = τ, ν, q) in order to determine the capabilities of the two detectors under study to discriminate between the different DM annihilation channels. This would provide invaluable information to shed light on the DM nature beyond the mass and cross section measurement that is available at direct searches and complementary to the other annihilation channels explored in indirect searches with gamma-ray satellites and telescopes. We will also explore the sensitivities that both detectors have to these parameters. The parameter space has been sampled using a MCMC based on the MonteCUBES [80] software. We perform this scan for simulated true values of both σ = 0 and BR_xσ = 0.3 fb. The running time of the experiments were set to 10 years each with the efficiencies and energy resolutions summarized in Table I. For the MIND detector we separate the signal in muon neutrinos and antineutrinos, exploiting the magnetization of the detector to separate the two samples. For the GLACIER detector magnetization would be challenging and we therefore combine the neutrino and antineutrino samples. On the other hand, we exploit the capability of GLACIER of discerning the neutrino flavour and consider electron and muon neutrinos separately. In all cases, the threshold was set to 2 GeV and the events were distributed in bins of 1 GeV width.

Since we are simultaneously scanning over all the parameters, we can easily see whether or not there are any correlations among the different branching ratios and what are the actual sensitivities to the parameters when marginalizing over the others. Regarding the DM mass, which could a priori present degeneracies with the other parameters under study, its determination is expected to be free of degeneracies with other parameters since it corresponds to the cutoff of the neutrino spectra and will be easily detected for annihilations into neutrinos or taus. Thus, we will keep this parameter fixed in the present study for

FIG. III: The most probable regions at 68 %, 90 %, and 95 % posterior probability and a DM mass of 10 GeV projected onto the BR_bσ − BR_cσ plane. This simulation was made for GLACIER with a DM mass assuming a true BR_bσ = 0.3 fb as the only source of neutrinos in DM annihilations. We can clearly see the linear degeneracy between the two parameters, motivating the study of only an effective quark channel BR_qσ.

simplicity. As we will show, in general, the sensitivities to the different branching ratios turn out to be fairly independent, since the sum will be bounded from above by the total event rate.

For every scan in the MCMC, we generate four chains with a total number of 2 · 10^5 samples per chain, check the variance within each chain and compare it with the variance of the overall sample in order to gauge the convergence of the chains. In all cases presented, we obtained a good convergence (R − 1 < 10^{−3})^2. The MCMC priors were assumed to be flat in the scanned parameters.

A. Results

In Fig. III, we illustrate the degeneracy between the DM annihilations into b and c quarks with a simulation for GLACIER with a DM mass of 10 GeV and BR_bσ = 0.3 fb and keeping BR_bσ and BR_cσ as free parameters in the fit. As we will see later, this corresponds to the most favourable setting and, from this figure, it is apparent that the two channels cannot

2 See Ref. [81] for the definition of this measure.

be distinguished, and thus it makes sense only to fit the combination BR_q = BR_b + kBR_c in our analysis, where k ≃ 0.4 accounts for the smaller number of neutrinos resulting from each annihilation into cc̄. In order to simulate this channel we take the events expected from DM annihilation into bb̄.

In Tab. II, we present the results for our MCMC simulations for the case when there is no signal. The numbers correspond to the 90 % limit on the posterior probability and can be interpreted as the sensitivity reach of the experiment to each parameter. From the table, we can clearly see that the GLACIER detector would be significantly more sensitive to DM annihilations at low DM mass than the MIND one, having typical sensitivity of a few 10^{−2} fb for both BR_τ σ and BR_ν σ, where the corresponding MIND sensitivies are O(0.1 − 1) fb. There are several reasons why the MIND sensitivities are worse than the ones for GLACIER. First of all, the signal statistics are higher at GLACIER, since it considers both electrons and muons, and because of a higher assumed efficiency. In particular, the MIND efficiency is very bad at low energies, leading to the significantly worse bounds for the case of 10 GeV DM mass. Furthermore, the angular and energy resolutions of the LArTPC are better, leading to a better background rejection in these experiments.

These sensitivity limits should be compared to the current bounds on the spin-dependent DM cross section. The most stringent direct bounds at the simulated masses are σ ≲ 400 fb at 10 GeV (PICASSO [15]) and σ ≲ 90 fb at 25 GeV (COUPP [16]). For the 10 GeV case, the present exclusion limit of PICASSO is also close to the lower part of the region required to explain the DAMA/LIBRA signal when interpreted as spin-dependent scatterings. Thus, depending on the dominating annihilation channel, the current bounds could be improved by up to five orders of magnitude in the most optimistic case of GLACIER, a DM mass of 10 GeV, and annihilations directly into neutrinos. However, it should be pointed out that DM is not required to have any branching ratio at all into channels that produce a neutrino flux, and thus direct detection experiments will always be complementary to indirect searches. However, if an annihilation branching ratio of at least ∼ 10^{−3} to heavy quarks, ∼ 10^{−4} to τ^+τ^− or ∼ 10^{−5} to neutrinos is present, the DM spin-dependent scattering interpretation of the DAMA/LIBRA signal can be probed at the GLACIER detector. Similarly, for a spin-independent scattering interpretation of DAMA/LIBRA, branching ratios of ∼ 10^{−1} to quarks, ∼ 10^{−2} to τ^+τ^− and ∼ 10^{−3} at GLACIER could be probed.

In comparison to the results obtained for Super-K [5], we find that the MIND experiment would be of comparable sensitivity, while any of the LArTPC experiments studied would out-perform Super-K in most cases. However, it has to be borne in mind that the capabilities of a liquid argon detector have been significantly less studied and simulated than for magnetized iron calorimeters such as MIND, thus, the better performance of GLACIER is conditioned to achieving the optimistic assumptions listed in Tab. I. Typically, the sensitivity to BR_qσ is significantly worse due to the softer spectrum of this channel that makes it more contaminated by the atmospheric neutrino background. Indeed, we have verified that increasing the atmospheric background with less restrictive cuts greatly deteriorates the reach in BR_qσ while having a small impact in the measurement of the other two parameters. Moreover, as can be seen from Fig. II, a smaller flux of neutrinos per annihilation as compared to the other annihilation channels is obtained for the quarks. Conversely, the present bounds on this channel are also weaker and a MIND detector would actually provide some improvement on this channel as compared to the Super-K bounds given its better angular resolution and, hence, background rejection. It is also interesting to note that the sensitivity of the GLACIER detector decreases with the DM mass assumed, as expected from the reduced neutrino flux (c.f. Fig. II). On the other hand, the sensitivity of the MIND detector increases with the DM mass demonstrating the better optimization of this detector to high neutrino energies.

In Fig. IV we show the preferred regions of the parameter space in the case of simulated BR_xσ = 0.3 fb. As expected from the sensitivities, the MIND detector is only capable of distinguishing BR_ν σ from zero, while the signal for BR_τ σ is close to being detectable. On the other hand, GLACIER would be able to clearly identify the nature of the DM branching ratios into both τs and νs, and being close to the sensitivity needed for detecting BR_qσ at this level. The reproduction of the parameters by GLACIER is remarkable and essentially free of correlations between the different branching ratios. There is a very small correlation between BR_τ and BR_q, since both of these spectra are both softer than the BR_ν one (c.f. Fig. II), but this correlation is almost negligible. Since the different branching ratios of DM could be singled out in an experiment like this, we would gain valuable information on the DM couplings to different particles, which in turn would be of large interest to constrain different models of DM. This would not be true in, e.g., direct detection experiments, which would only be sensitive to the total cross section on the target. It is important to remark that the discerning capability of the detectors between the different DM annihilation channels stems

Experiment DM mass BR_τ σ [fb] BR_ν σ [fb] BR_qσ [fb] MIND (100 kt) 10 GeV 0.70 0.35 3.4 25 GeV 0.34 0.15 1.7 LArTPC (34 kt) 10 GeV 0.15 0.11 0.73 25 GeV 0.16 0.10 0.21 GLACIER (100 kt) 10 GeV 1.5 · 10^{−2} 6.4 · 10^{−3} 0.25 25 GeV 1.0 · 10^{−2} 5.2 · 10^{−3} 0.19 Super-K data [5] 10 GeV 0.65 0.12 10 25 GeV 0.45 0.19 5.0

TABLE II: Sensitivities to the branching ratios multiplied by the capture cross section at 90 % posterior probability for different experiments and DM mass after 10 years data taking. The Super-K sensitivities are taken from Fig. 4 of Ref. [5].

almost exclusively from their energy resolution and the ability to reconstruct the different spectral shapes shown in Fig. II. On the other hand, the capability of the MIND detector to separate the neutrino and antineutrino samples does not help with this measurement since the corresponding antineutrino event shapes are extremely similar. Similarly, the information on the neutrino flavour GLACIER provides is largely irrelevant for the analysis and its ability to detect ν_e in addition to ν_μ only provides an increase in statistics but no complementary information to solve degeneracies. The slight degeneracy between BR_ν σ and the other parameters, in particular for the 10 GeV DM mass results for MIND, is mainly due to the 10 % systematic error assumed for the atmospheric background simulation and the energy resolution and statistics not being sufficient to tell the spectral shape of the background from a combination of BR_ν σ and BR_qσ. Notice that this effect also worsens the sensitivity estimated for the MIND detector, since relatively large values of BR_ν σ and BR_qσ simultaneously cannot be disentangled from a situation with a smaller atmospheric background accommodated within the 10 % systematic allowed. Thus, the sensitivity limits derived here, in particular for the MIND detector, are more conservative than the ones presented for Super-K in Ref. [5] since only one branching ratio a time was considered there and in order for the signal to mimic the background a combination of both BR_ν σ and a

FIG. IV: Typical results for the most probable regions of BR_xσ (x = τ, ν, q) at 68 %, 90 %, and 95 % posterior probability and a DM mass of 10 (upper pannels) and 25 GeV (lower panels). The solid lines show the GLACIER (thick) and 34 kt LArTPC (thin) results, while the dotted lines show the MIND results. The results correspond to 10 years of exposure for GLACIER, the 34 kt LArTPC and MIND.

softer channel is necessary, as depicted by the degeneracy in the top left and top center panels of Fig. IV.

V. SUMMARY

In this paper we have studied the detection of neutrinos as a possible indirect signal of low mass (10–25 GeV) DM annihilating in the Sun at the next generation of neutrino detectors, as well as the determination of which annihilation channels are present. Due to the results of the DAMA/LIBRA, CoGeNT and CRESST collaborations, this mass range, which is unaccessible to neutrino telescopes due to the low neutrino energy, is of great interest. We have focused mainly on the LArTPC and MIND detector technologies. Apart from having good energy and angular resolution capabilities, these two detector types are under consideration for several future neutrino experiments. For the LArTPC, we consider both a 34 kt and a 100 kt version, corresponding to detectors proposed for the LBNE and LAGUNA projects, respectively, and for the MIND we will consider a 100 kt detector, corresponding to the neutrino factory proposal or an upgraded version of INO.

For the signal rate, we computed the solar capture rate of DM following Ref. [1, 78] and using the standard BP2000 Solar Model [77]. Our results are presented in the variables BR_xσ (x = τ, ν, q), where BR_x is the annihilation branching ratio into xx̄ and σ is the total spin-dependent DM-nucleon cross section. We have not included a systematic error on the signal, since this will mainly be an overall factor due to different capture mechanics and therefore lead to a simple rescaling of the BR_xσ parameters.

The main background to our signal is atmospheric neutrinos, for which we assume a systematic overall normalization error of 10 %. In order to suppress this background, we use the fact that the detectors under study have the capability of measuring the energy and direction of the incoming neutrino and demand that this direction is within the detector angular resolution from the direction of the Sun.

Our results show that with 10 years data the facilities under study would have a sensitivity to BR_xσ of O(10^{−2} −1) fb (c.f. Tab. II) with the best sensitivity being achieved for the 100 kt LArTPC detector and the worst for the MIND technology. This should be put into context by the current bounds from direct detection experiments, which give σ ≲ 400 fb at 10 GeV mass (PICASSO [15]) and σ ≲ 90 fb at 25 GeV (COUPP [16]) and the region favoured by the DAMA/LIBRA signal around 10 GeV mass and σ ∼ 1 pb. The latest results by SIMPLE [17] improve on these limits down to ∼ 10 fb. The sensitivities to different annihilation channels are essentially independent without correlations among them. For comparison with current experiments, the MIND detector would perform essentially on the level of the current Super-K [5] data, although the analysis presented here is more conservative, allowing for degeneracies among the different channels and the atmospheric background that were not taken into account by the analysis of Super-K data and for which they would be potentially more dangerous, since only a counting experiment with no energy information was assumed in the study. On the other hand, the 100 kt LArTPC would out-perform Super-K by almost two orders of magnitude. In general, the sensitivities are better for the νν̄ channel and worse for the qq̄ channel, due to the spectra being harder and softer, respectively, as well as a lower event rate per annihilation for the qq̄ channel, and thus leading to different levels of confusion with the soft atmospheric spectrum.

We have also simulated the results for a typical signal when BR_xσ = 0.3 fb for all x. As expected from Tab. II, it would be challenging for all of the considered experiments to distinguish BR_qσ from zero, while the LArTPC detectors would clearly measure BR_ν σ and to some extent BR_τ σ (c.f. Fig. IV). We point out that the experiments considered have the remarkable ability to tell apart the different annihilation branching ratios exploiting their energy resolution, something impossible with a counting experiment such as the study performed for present Super-K data. This demonstrates the complementarity of DM searches at neutrino detectors compared to other DM probes in the study of the nature of DM.

We conclude that the prospects for improving the limits on low mass DM annihilations in the Sun in future neutrino experiments are in general good. Although current results for Super-K rule out the DAMA and CoGeNT signals with large branching ratios into channels giving rise to neutrinos, solutions with subdominant annihilation into these channels are still viable and present bounds can be improved by almost two orders of magnitude at a detector with the characteristics of GLACIER. Furthermore, these future experiments would have some capabilities of measuring the actual branching ratio into different channels by using the shape of the energy spectrum and such a measurement would provide important information on the nature of the DM.

Acknowledgments

We would like to thank A. Cervera, J.M. Conrad, P. Hernandez, P. Huber, S. Palomares- Ruiz, and M.H. Shaevitz for useful discussions. The work of M.B. is supported by the European Union through the European Commission Marie Curie Actions Framework Programme 7 Intra-European Fellowship: Neutrino Evolution, O.M. is supported by AYA2008- 03531 and CSD2007-00060. We also acknowledge the support from the European Union under the European Commission Framework Programme 7 Design Study EUROnu, Project 212372 and the project Consolider-Ingenio CUP.

[1] G. Jungman, M. Kamionkowski, and K. Griest, Supersymmetric dark matter, Phys. Rept.

267 (1996) 195–373, [hep-ph/9506380].

[2] G. Servant and T. M. Tait, Is the lightest Kaluza-Klein particle a viable dark matter candidate?, Nucl.Phys. B650 (2003) 391–419, [hep-ph/0206071].

[3] H.-C. Cheng, J. L. Feng, and K. T. Matchev, Kaluza-Klein dark matter, Phys.Rev.Lett. 89 (2002) 211301, [hep-ph/0207125].

[4] G. Bertone, D. Hooper, and J. Silk, Particle dark matter: Evidence, candidates and constraints, Phys.Rept. 405 (2005) 279–390, [hep-ph/0404175].

[5] R. Kappl and M. W. Winkler, New Limits on Dark Matter from Super-Kamiokande,

arXiv:1104.0679.

[6] R. Bernabei et. al., New results from DAMA/LIBRA, Eur. Phys. J. C67 (2010) 39–49, [arXiv:1002.1028].

[7] XENON100 Collaboration, E. Aprile et. al., Dark Matter Results from 100 Live Days of XENON100 Data, arXiv:1104.2549.

[8] XENON10 Collaboration, J. Angle et. al., A search for light dark matter in XENON10 data, arXiv:1104.3088.

[9] CDMS-II Collaboration, Z. Ahmed et. al., Results from a Low-Energy Analysis of the CDMS II Germanium Data, Phys. Rev. Lett. 106 (2011) 131302, [arXiv:1011.2482].

[10] CoGeNT Collaboration, C. E. Aalseth et. al., Results from a Search for Light-Mass Dark Matter with a P-type Point Contact Germanium Detector, Phys. Rev. Lett. 106 (2011) 131301, [arXiv:1002.4703].

[11] D. Hooper, J. I. Collar, J. Hall, and D. McKinsey, A Consistent Dark Matter Interpretation For CoGeNT and DAMA/LIBRA, Phys. Rev. D82 (2010) 123509, [arXiv:1007.1005].

[12] T. Schwetz, Direct detection data and possible hints for low-mass WIMPs, arXiv:1011.5432. [13] “2011 may symposium on dark matter, space telescope science institute baltimore, maryland.” https://webcast.stsci.edu/webcast/detail.xhtml?talkid=2426.

[14] J. Jochum et. al., The CRESST dark matter search, Prog. Part. Nucl. Phys. 66 (2011) 202–207.

[15] S. Archambault et. al., Dark Matter Spin-Dependent Limits for WIMP Interactions on 19-F by PICASSO, Phys. Lett. B682 (2009) 185–192, [arXiv:0907.0307].

[16] E. Behnke et. al., Improved Limits on Spin-Dependent WIMP-Proton Interactions from a Two Liter CF_3I Bubble Chamber, Phys. Rev. Lett. 106 (2011) 021303, [arXiv:1008.3518].

[17] E. Behnke et. al., Final Analysis and Results of the Phase II SIMPLE Dark Matter

Search,arXiv:1106.3014].

[18] J. Silk, K. A. Olive, and M. Srednicki, The photino, the sun, and high-energy neutrinos, Phys. Rev. Lett. 55 (1985) 257–259.

[19] L. M. Krauss, K. Freese, W. Press, and D. Spergel, Cold dark matter candidates and the solar neutrino problem, Astrophys. J. 299 (1985) 1001.

[20] K. Freese, Can Scalar Neutrinos Or Massive Dirac Neutrinos Be the Missing Mass?, Phys.

Lett. B167 (1986) 295.

[21] L. M. Krauss, M. Srednicki, and F. Wilczek, Solar System Constraints and Signatures for Dark Matter Candidates, Phys. Rev. D33 (1986) 2079–2083.

[22] Super-Kamiokande Collaboration, S. Desai et. al., Search for dark matter WIMPs using upward through-going muons in Super-Kamiokande, Phys. Rev. D70 (2004) 083523, [hep-ex/0404025].

[23] V. Niro, A. Bottino, N. Fornengo, and S. Scopel, Investigating light neutralinos at neutrino telescopes, Phys.Rev. D80 (2009) 095019, [arXiv:0909.2348].

[24] M. M. Boliev et. al., Search for supersymmetric dark matter with Baksan underground telescope, Nucl. Phys. Proc. Suppl. 48 (1996) 83–86.

[25] V. D. Barger, F. Halzen, D. Hooper, and C. Kao, Indirect search for neutralino dark matter with high energy neutrinos, Phys. Rev. D65 (2002) 075022, [hep-ph/0105182].

[26] AMANDA Collaboration, M. Ackermann et. al., Limits to the muon flux from neutralino annihilations in the Sun with the AMANDA detector, Astropart. Phys. 24 (2006) 459–466, [astro-ph/0508518].

[27] F. Halzen and D. Hooper, Prospects for detecting dark matter with neutrino telescopes in light of recent results from direct detection experiments, Phys. Rev. D73 (2006) 123507, [hep-ph/0510048].

[28] ICECUBE Collaboration, R. Abbasi et. al., Limits on a muon flux from neutralino annihilations in the Sun with the IceCube 22-string detector, Phys. Rev. Lett. 102 (2009) 201302, [arXiv:0902.2460].

[29] ANTARES Collaboration, S. Loucatos, Indirect search for dark matter with the ANTARES neutrino telescope, AIP Conf. Proc. 1200 (2010) 989–992.

[30] O. Mena, S. Palomares-Ruiz, and S. Pascoli, Reconstructing WIMP properties with neutrino detectors, Phys. Lett. B664 (2008) 92–96, [arXiv:0706.3909].

[31] A. Bueno, R. Cid, S. Navas, D. Hooper, and T. Weiler, Indirect detection of dark matter WIMPs in a liquid argon TPC, JCAP 0501 (2005) 001, [hep-ph/0410206].

[32] J. Kumar, J. G. Learned, M. Sakai, and S. Smith, Dark Matter Detection With Electron Neutrinos in Liquid Scintillation Detectors, arXiv:1103.3270.

[33] KAMIOKANDE-II Collaboration, K. Hirata et. al., Observation of a Neutrino Burst from the Supernova SN 1987a, Phys. Rev. Lett. 58 (1987) 1490–1493.

[34] Super-Kamiokande Collaboration, Y. Fukuda et. al., Evidence for oscillation of atmospheric neutrinos, Phys. Rev. Lett. 81 (1998) 1562–1567, [hep-ex/9807003].

[35] SNO Collaboration, Q. R. Ahmad et. al., Direct evidence for neutrino flavor transformation from neutral-current interactions in the Sudbury Neutrino Observatory, Phys. Rev. Lett. 89 (2002) 011301, [nucl-ex/0204008].

[36] KamLAND Collaboration, S. Abe et. al., Precision Measurement of Neutrino Oscillation Parameters with KamLAND, Phys. Rev. Lett. 100 (2008) 221803, [arXiv:0801.4589].

[37] The Borexino Collaboration, C. Arpesella et. al., Direct Measurement of the Be-7 Solar Neutrino Flux with 192 Days of Borexino Data, Phys. Rev. Lett. 101 (2008) 091302, [arXiv:0805.3843].

[38] K2K Collaboration Collaboration, M. Ahn et. al., Measurement of Neutrino Oscillation by the K2K Experiment, Phys.Rev. D74 (2006) 072003, [hep-ex/0606032].

[39] MINOS Collaboration, P. Adamson et. al., Measurement of Neutrino Oscillations with the MINOS Detectors in the NuMI Beam, Phys. Rev. Lett. 101 (2008) 131802, [arXiv:0806.2237].

[40] M. C. Gonzalez-Garcia and M. Maltoni, Phenomenology with Massive Neutrinos, Phys.

Rept. 460 (2008) 1–129, [arXiv:0704.1800].

[41] A. Strumia and F. Vissani, Neutrino masses and mixings and . . . , hep-ph/0606054. [42] The T2K Collaboration, Y. Itow et. al., The JHF-Kamioka neutrino project,

hep-ex/0106019.

[43] D. Autiero, J. Aysto, A. Badertscher, L. B. Bezrukov, J. Bouchez, et. al., Large underground, liquid based detectors for astro-particle physics in Europe: Scientific case and prospects, JCAP 0711 (2007) 011, [arXiv:0705.0116].

[44] S. Raby, T. Walker, K. Babu, H. Baer, A. Balantekin, et. al., DUSEL Theory White Paper,

arXiv:0810.4551.

[45] K. T. Lesko, The US National Science Foundation’s deep underground laboratory at Homestake - DUSEL, J.Phys.Conf.Ser. 120 (2008) 052011.

[46] INO Collaboration, A. Raychaudhuri, Status of INO, PoS NUFACT08 (2008) 045. [47] V. Datar, S. Jena, S. Kalmani, N. Mondal, P. Nagaraj, et. al., Development of glass resistive plate chambers for INO experiment, Nucl.Instrum.Meth. A602 (2009) 744–748.

[48] LAGUNA Collaboration Collaboration, A. Rubbia, The LAGUNA design study:

Towards giant liquid based underground detectors for neutrino physics and astrophysics and proton decay searches, Acta Phys.Polon. B41 (2010) 1727–1732.

[49] J. C. Pati and A. Salam, Is Baryon Number Conserved?, Phys. Rev. Lett. 31 (1973) 661–664. [50] A. Rubbia, A CERN-based high-intensity high-energy proton source for long baseline neutrino oscillation experiments with next- generation large underground detectors for proton decay searches and neutrino physics and astrophysics, arXiv:1003.1921.

[51] V. Barger, M. Bishai, D. Bogert, C. Bromberg, A. Curioni, et. al., Report of the US long baseline neutrino experiment study, arXiv:0705.4396.

[52] ISS Physics Working Group Collaboration, A. Bandyopadhyay et. al., Physics at a future Neutrino Factory and super-beam facility, 0710.4947.

[53] LENA Collaboration, M. Wurm et. al., The next-generation liquid-scintillator neutrino observatory LENA, arXiv:1104.5620.

[54] A. Laing, Optimization of Detectors for the Golden Channel at a Neutrino Factory. PhD thesis, Glasgow university, 2010.

[55] G. Bari et. al., Analysis of the performance of the MONOLITH prototype, Nucl. Instrum.

Meth. A508 (2003) 170–174.

[56] C. Rubbia, The liquid-argon time projection chamber: a new concept for neutrino detector, Tech. Rep. CERN-EP/77-08, 1977.

[57] ICARUS Collaboration, S. Amerio et. al., Design, construction and tests of the ICARUS T600 detector, Nucl. Instrum. Meth. A527 (2004) 329–410.

[58] F. Varanini, Preliminary experimental results from the ICARUS test facility at INFN-LNL, Nucl. Phys. Proc. Suppl. 197 (2009) 313–316.

[59] ICARUS Collaboration, A. Menegolli, Status of the ICARUS T600 detector at the LNGS, J. Phys. Conf. Ser. 203 (2010) 012107.

[60] A. Rubbia, Experiments for CP-violation: A giant liquid argon scintillation, Cerenkov and charge imaging experiment?, hep-ph/0402110.

[61] “Laguna - large apparatus studying grand unification and neutrino astrophysics.”

http://www.laguna-science.eu/.

[62] “Lbne - long-baseline neutrino experiment.” http://lbne.fnal.gov/. [63] V. Barger, P. Huber, D. Marfatia, and W. Winter, Upgraded experiments with super neutrino beams: Reach versus Exposure, Phys. Rev. D76 (2007) 031301, [hep-ph/0610301].

[64] A. Cervera, F. Dydak, and J. Gomez Cadenas, A large magnetic detector for the neutrino factory, Nucl. Instrum. Meth. A451 (2000) 123–130.

[65] A. Cervera, A. Laing, J. Martin-Albo, and F. Soler, Performance of the MIND detector at a Neutrino Factory using realistic muon reconstruction, Nucl.Instrum.Meth. A624 (2010) 601–614, [arXiv:1004.0358].

[66] S. Geer, Neutrino beams from muon storage rings: Characteristics and physics potential, Phys. Rev. D57 (1998) 6989–6997, [hep-ph/9712290].

[67] A. De Rujula, M. B. Gavela, and P. Hernandez, Neutrino oscillation physics with a neutrino factory, Nucl. Phys. B547 (1999) 21–38, [hep-ph/9811390].

[68] “International design study of the neutrino factory.” http://www.ids-nf.org. [69] ISS Detector Working Group Collaboration, T. Abe et. al., Detectors and flux instrumentation for future neutrino facilities, JINST 4 (2009) T05001, [arXiv:0712.4129].

[70] “India-based neutrino observatory.” http://www.ino.tifr.res.in/ino/. [71] S. K. Agarwalla, Some aspects of neutrino mixing and oscillations. PhD thesis, 2009.

arXiv:0908.4267.

[72] S. K. Agarwalla, P. Huber, J. Tang, and W. Winter, Optimization of the Neutrino Factory, revisited, JHEP 1101 (2011) 120, [arXiv:1012.1872].

[73] MINOS Collaboration, D. G. Michael et. al., The Magnetized steel and scintillator calorimeters of the MINOS experiment, Nucl. Instrum. Meth. A596 (2008) 190–228, [arXiv:0805.3170].

[74] P. Adamson et. al., The MINOS calibration detector, Nucl. Instrum. Meth. A556 (2006) 119–133.

[75] M. Cirelli, N. Fornengo, T. Montaruli, I. A. Sokalski, A. Strumia, et. al., Spectra of neutrinos from dark matter annihilations, Nucl.Phys. B727 (2005) 99–138, [hep-ph/0506298].

[76] M. Blennow, J. Edsjö, and T. Ohlsson, Neutrinos from WIMP annihilations using a full three-flavor Monte Carlo, JCAP 0801 (2008) 021, [arXiv:0709.3898].

[77] J. N. Bahcall, M. H. Pinsonneault, and S. Basu, Solar models: Current epoch and time dependences, neutrinos, and helioseismological properties, Astrophys. J. 555 (2001) 990–1012, [astro-ph/0010346].

[78] A. Gould, Cosmological density of WIMPs from solar and terrestrial annihilations, Astrophys. J. 388 (1992) 338–344.

[79] M. Honda, T. Kajita, K. Kasahara, and S. Midorikawa, Improvement of low energy atmospheric neutrino flux calculation using the JAM nuclear interaction model,

arXiv:1102.2688.

[80] M. Blennow and E. Fernandez-Martinez, Neutrino oscillation parameter sampling with MonteCUBES, Comput. Phys. Commun. 181 (2010) 227–231, [arXiv:0903.3985].

[81] A. Gelman and D. B. Rubin, Inference from Iterative Simulation Using Multiple Sequences, Statist. Sci. 7 (1992) 457–472.