arXiv:1106.4155v1 [physics.atom-ph] 21 Jun 2011

Differential energy measurement between He- and Li-like uranium intra-shell transitions

M. Trassinelli^1, A. Kumar^2, H.F. Beyer^3, P. Indelicato^4, R. Märtin^{3,5}, R. Reuschl^1, Y.S. Kozhedub^6, C. Brandau^3, H. Bräuning^3, S. Geyer^3, A. Gumberidze^7, S. Hess^3, P. Jagodzinski^8, C. Kozhuharov^3, D. Liesen^3, U. Spillmann^3, S. Trotsenko^9, G. Weber^{3,5}, D.F.A. Winters^{3,5}, Th. Stöhlker^{3,5,9}

1 Institut des NanoSciences de Paris; CNRS; Univ. Pierre et Marie Curie - Paris 6, Paris, France 2 Nuclear Physics Division, Bhabha Atomic Research Centre, Mumbai, India 3 GSI Helmholtzzentrum für Schwerionenforschung GmbH, Darmstadt, Germany 4 Laboratoire Kastler Brossel, École Normale Supérieure; CNRS; Univ. Pierre et Marie Curie - Paris 6, Paris, France 5 Physikalisches Institut, Univ. Heidelberg, Heidelberg, Germany 6 Department of Physics, St. Petersburg State Univ., St. Petersburg, Russia 7 ExtreMe Matter Institue, Darmstadt, Germany 8 Institute of Physics, Jan Kochanowski Univ., Kielce, Poland 9 Helmholtz-Institut Jena, Jena, Germany

E-mail: martino.trassinelli@insp.jussieu.fr

Abstract. We present the first clear identification and highly accurate measurement of the intra-shell transition 1s2p^3P2 → 1s2s^3S1 of He-like uranium performed via X-ray spectroscopy. The present experiment has been conducted at the gas-jet target of the ESR storage ring in GSI (Darmstadt, Germany) where a Bragg spectrometer, with a bent germanium crystal, and a Ge(i) detector were mounted. Using the ESR deceleration capabilities, we performed a differential measurement between the 1s2p^3P2 → 1s2s^3S1 He-like U transition energy, at 4510 eV, and the 1s^22p^2P_{3/2} → 1s^22s^2S_{1/2} Li-like U transition energy, at 4460 eV. By a proper choice of the ion velocities, the X-ray energies from the He- and Li-like ions could be measured, in the laboratory frame, at the same photon energy. This allowed for a drastic reduction of the experimental systematic uncertainties, principally due to the Doppler effect, and for a comparison with the theory without the uncertainties arising from one-photon QED predictions and nuclear size corrections.

1. Introduction Heliumlike heavy ion spectroscopy represents an unique probe of relativistic and Quantum Electrodynamics (QED) effects on the electron-electron interaction in the domain of strong fields. As compared to a one-electron and many-electron ions, these ions are the simplest multibody systems where theory can make predictions in a rigorous way. Here we present the first clear identification of the intra-shell transition 1s2p^3P_2 → 1s2s^3S_1 of He-like uranium performed via X-ray spectroscopy. In addition, using the deceleration capabilities of the ESR storage ring, we performed a differential measurement between this transition and the analog transition

Figure 1. Sketch of the experimental arrangement at the gas-jet target of the ESR storage ring. A Ge(i) detector and a focusing Bragg spectrometer are simultaneously viewing the X-ray source defined by the overlap of the circulating ion beam with the gas-jet.

Figure 2. The X-ray spectrum, originating from 43.57 MeV/u He-like uranium ions, as recorded by the Ge(i) detector. The energies correspond to the emitter frame. The inset shows a magnification of the region around the^3P_2 →^3 S_1 transition [1].

1s^22p^2P_{3/2} → 1s^22s^2S_{1/2} of Li-like uranium. In this paper we will focus on some aspects of this measurement and in particular on its outlooks. A more complete description of the experiment can be found in Ref. [1].

2. Description of the experimental setup and data acquisition The experiment was performed at the GSI experimental storage ring ESR in August 2007. Here, a H-like uranium beam with up to ∼ 4×10^7 ions was stored, cooled, and decelerated to an energy of 43.57 MeV/u. Excited He-like ions were formed by electron capture during the interaction of the ion beam with a supersonic nitrogen gas-jet target. At the selected velocity, electrons are primarily captured into shells with principal quantum number of n ≤ 20, which efficiently populate the n = 2^3P_2 state via cascade feeding. This state decays to the n = 2^3S_1 state via an electric dipole (E1) intra-shell transition (branching ration 30%) with the emission of photons of an energy close to 4.51 keV.

For the X-ray detection, we used a standard Ge(i) solid-state detector and a new Bragg spectrometer specially designed for accurate spectroscopy of fast ions. The two instruments are complementary: The Ge(i) detector has a high detection efficiency and covers a wide spectral range with a moderate spectral resolving power. The focusing crystal spectrometer serves as an accurate wavelength comparator in a narrow wavelength interval. The Ge(i) solid-state detector and the Bragg crystal spectrometer were mounted under observation angles of 35^∘ and 90^∘, respectively. Both instruments were separated from the ultra-high vacuum of the gas-target chamber by 100μm-thick beryllium windows transparent for the few keV X rays. A scheme of the experimental setup is presented in Fig. 1. The crystal spectrometer [2] was mounted in the Johann geometry in a fixed angle configuration allowing for the detection of X rays with a Bragg angle Θ around 46.0^∘. The spectrometer was equipped with a Ge(220) crystal cylindrically bent, with a radius of curvature of R = 800 mm, and an X-ray CCD camera (Andor DO420), as position sensitive detector, positioned on the Rowland circle (the focusing position of the Johann spectrometer). The Rowland-circle plane of the spectrometer was placed perpendicular to the ion-beam direction. In such a configuration the spectral lines appear slanted in the image plane of the spectrometer with their slope proportional to the ion-beam velocity. For a minimization of the systematic effects due to the ion velocity and alignment uncertainties, the observation angle θ = 90^∘ was chosen for the crystal spectrometer. The value of the ion velocity was selected such that the photon energy, E in the ion frame, was Doppler-shifted to the value E_{lab} = 4.3 keV in the laboratory frame. This value of E_{lab} was chosen to have the He-like uranium spectral line position on the CCD close to the position of the 8.6 keV Kα_{1,2} lines of zinc, which were observed in second order diffraction. The zinc lines were used to monitor the spectrometer stability and they were produced by a commercial X-ray tube and a removable zinc plate between the target chamber and the crystal. Additional information on the experimental setup can be found in Ref. [1].

For the accurate energy measurement of the He-like intra-shell transition energy, the 1s^22p^2P_{3/2} → 1s^22s^2S_{1/2} transition in Li-like U, which has an energy of 4459.37 ± 0.21 eV [3, 4] was chosen as calibration line. Similar to the He-like system, the Li-like ions were obtained by electron capture into He-like uranium ions. To match the energy of the He-like transition, an energy of 32.63 MeV/u was selected to Doppler-shift the Li-like transition.

The data were acquired during a total period of about 4.5 days. Survey spectra were recorded by the Ge(i) detector. Here the 2^3P_2 → 2^3S_1 transition was easily identified close to the lines originating from n^′ → n transitions (see Fig. 2) with n = 3 − 4 [1]. The measurement with the crystal spectrometer provided a much higher accuracy for the spectral line position. In this case, the observable energy range, principally limited by the ion beam diameter and its distance from the crystal, was in the order of 4308 ± 40 eV. For the transition in He-like uranium, a total number of about 300 counts in an effective acquisition time of ∼ 24 hours was accumulated. For the Li-like ions, about 160 counts in ∼ 5 hours were recorded. These spectra are characterized by a very low background drastically reduced only by the energy cuts and cluster analysis of the CCD raw data.

High resolution energy spectra were obtained by projecting the transition lines from the Bragg spectrometer CCD (Fig. 3 left) on the dispersion axis (the x-axis in the figure), after the slope correction due to the Doppler effect (Fig. 3 right). We note that the shape of the lines

Figure 3. Left: Image of the He-like uranium intra-shell transitions on the Bragg spectrometer position sensitive detector. The transition energy increases with increasing x-position. The slightly negative slope of the line is due to the relativistic velocity of the fast ions. Right: The corresponding high resolution energy spectrum from the projection on the dispersion axis (x-axis) [1].

corresponding to the fast ion emission is slightly asymmetric. Such an asymmetry might be caused by a non-uniform X-ray reflectivity of the crystal surface. After the experiment, a survey of the crystal surface by the X-ray Optics Group from the Institute for Optics and Quantum Electronics in Jena indeed revealed a non-uniformity.

3. Results and discussions Starting from the Bragg law, the energy of the He-like U transition E_{He} is related to the energy of the calibration line E_{Li} by the simple formula

E_{He} ≈ E_{Li} γ_{He} γ_{Li} ( 1 + Δx D tan Θ_B ) , (1)

where Δx = x_{He} − x_{Li} denotes the distance between the He- and Li-like U line positions on the CCD and D the distance between crystal and CCD. γ_{He} = 1.04677 and γ_{Li} = 1.03503 are the Lorentz factors corresponding to the velocities of the stored H- and He-like ions, respectively. Their values are determined by the accurately known voltages of the electron cooler of the ESR [5]. From the experimental measurement of Δx, using Eq. (1), the energy of the 1s2p^3P_2 → 1s2s^3S_1 transition was determined to be

E_{He} = 4509.71 ± 0.48_{stat} ± 0.86_{syst} eV, (2)

The first uncertainty is statistical and the second one is due to the systematic uncertainties (quadratically summed). Principal contributions to the last term are i) the asymmetric response function of the spectrometer, ii) the calibration line and iii) the uncertainty of the observation angle. All other contributions, due to the accuracy of the electron cooler voltage, the crystal-detector distance, etc., are negligible. A more extended discussion on the systematic uncertainties can be found in Ref. [6]. The systematic effect introduced by this asymmetry has been estimated by comparing the results of the line position measurement obtained from different approaches (median distribution, and a series of fit adjustments). This contribution results to be the largest systematic uncertainty of 0.83 eV. The uncertainty of the observation angle, equal to 0.04^∘, contributes with 0.11 eV and it is due to the limited position accuracy of the gas-jet position (±0.5 mm) combined with the Doppler shift of the ion emission. We note, the use of the fast Li-like ion transition as calibration, instead of a stationary source, like the Zn Kα lines, causes a reduction of such a systematic uncertainty from 0.9 to 0.1 eV [6].

The measured transition energy for He-like uranium agrees well with all more recent theoretical predictions, which reflect different approaches: 4510.30 eV, using a multiconfiguration Dirac-Fock calculation with QED corrections included [1, 7], and 4509.86±0.07 eV, from an ab initio calculation [1, 8, 9] and other older calculations [10, 11, 12] (see Fig. 4 (left)). The accuracy of the present experiment, equal to 0.99 eV, is on the same order as the QED effects on the electron-electron interaction, 0.76 eV for this transition, but is too large to be sensitive to the two-loop QED effects that contributes with 0.20 eV [8, 9].

A more significant test of the electron-electron interaction in strong Coulomb fields, comes from the comparison between the measured He- and Li-like transition energy difference and the corresponding theoretical predictions. From the experimental side, the energy difference eliminates the uncertainty contribution due to the calibration line (0.21 eV), whereas, from the theoretical side, the systematic effects due to the one-electron QED and nuclear size uncertainties are canceled out. In this case we find

E_{He-Li} = 50.34 ± 0.48_{stat} ± 0.84_{syst} eV. (3)

In contrast to the absolute value of the transition energy, the difference carries an experimental systematic uncertainty, peak asymmetry excluded,that is reduced from 0.24 to 0.11 eV, where

Figure 4. Comparison between our result and different theory approaches for the He-like U intra-shell transition energy (left) and its relative measurement with respect to the Li-like transition (right). In these figures the reference of the different predictions are: Drake 1988 [10], Chen 1993 [11], Plante 1994 [12], Artmyev 2005 [9], Kozhedub 2008 [8] and Indelicato 2008 [7].

in practice only the observation angle accuracy contributes. This value is in agreement with the theoretical predictions: 49.96 eV [1, 7] and 50.30 ± 0.03 eV [1, 8, 9] where the QED effects on the electron-electron interaction contribute with 1.66 eV. For a visual comparison see Fig. 4 (right), where the role of the two-electron QED effect is presented. As in the absolute transition energy, the accuracy of the present experiment is on the edge to be sensitive to QED effects. However, in future experiments, improved and verified analyzer crystals together with an extended acquisition time will allow for more stringent tests of the two-electron QED contributions in heavy highly charged ions. A more extended discussion on the possible outlooks is presented in the next section.

4. Potential improvements From the analysis of the different uncertainty contributions, possible improvements of the present experiment can be clearly inferred. As presented in the previous section, the main source of accuracy limitation is due to the quality of the Germanium crystal employed for the Bragg spectrometer. A new crystal carefully selected and X-ray optically characterized could allow to eliminate completely such a systematic effect. In the relative measurement, the second largest contribution of the systematic uncertainties comes from the alignment accuracy of the crystal spectrometer with respect to the gas-jet position. This uncertainty can be reduced considerably by the use of two twin Bragg spectrometers at observation angles of +90^∘ and −90^∘. An accuracy better than 0.01^∘ could be achieved on the alignment of the two spectrometer with respect to each other. In this case, the position of the gas-jet with respect to the spectrometers axis can be used for compensation by comparing the energy measurement from each spectrometer. A reduction of the uncertainty from 0.11 eV to about 0.02 eV can be expected. The use of a second spectrometer will also improve the statistical uncertainty. A larger crystal radius of curvature will enhance the spectrometer dispersion implying a reduction of instrumental efficiency that can be compensated by a larger position sensitive detector area, limited to 26.6 × 6.6 mm^2 in the present experiment. Finally, the simplest improvement can come by a longer acquisition time that, we remember, was limited in the present experiment to only 4.5 days. A reduction of the statistical uncertainty from 0.5 to 0.1 eV can be expected.

With these upgrades, a future experiment could provide a critical test of the theoretical predictions for the interaction between bound electrons in the presences of a strong Coulomb field where, in particular, the QED contributions could be accurately measured. In the present experiment we limited to compare He- and Li-like heavy ions. In the future, this study could be extended to additional atomic systems, like Be- and B-like ions, applying the same experimental technique strongly based on the Doppler tuning of the X-ray energy in the laboratory frame.

5. Conclusions In summary, we report the first clear identification of the 1s2p^3P_2 → 1s2s^3S_1 transition in Helike uranium. In addition we measured the transition energy of such a transition with a relative uncertainty of 2 × 10^{−4}, which is currently the most accurate test of many-body and QED contributions in excited levels of very heavy He-like ions. Differential measurements between different charge states of the same fast ion pave the way for increased sensitivity via the reduction of the systematic uncertainty in both the experimental and the theoretical side. We also discuss several possible improvements that can be applied to the present experiment to perform more stringent tests on QED and relativistic effects in few-electrons heavy highly charged ions.

Acknowledgments We thank V. Shabaev, A.N. Artemyev and A. Surzhykov for interesting discussions and theoretical support. We thank O. Wehrhan, H. Marschner and E. Förster for the characterization of the spectrometer crystal. The close collaboration and support by the members of the ESR team, the A. von Humboldt Foundation (M.T.), the DAAD (A.K., No.: A/05/52927) and I3 EURONS (EC contract no. 506065) are gratefully acknowledged. This work was partially supported by Helmholtz Alliance HA216/EMMI. Institut des Nanosciences de Paris and Laboratoire Kastler Brossel are Unité Mixte de Recherche du CNRS n^∘ 7588 and n^∘ 8552, respectively.

References

[1] Trassinelli M, Kumar A, Beyer H F, Indelicato P, Märtin R, Reuschl R, Kozhedub Y S, Brandau C, Bräuning H, Geyer S, Gumberidze A, Hess S, Jagodzinski P, Kozhuharov C, Liesen D, Spillmann U, Trotsenko S, Weber G, Winters D F A and Stöhlker T 2009 Eur. Phys. Lett. 87 63001 [2] Beyer H F, Indelicato P, Finlayson K D, Liesen D and Deslattes R D 1991 Phys. Rev. A 43 223 [3] Beiersdorfer P, Knapp D, Marrs R E, Elliott S R and Chen M H 1993 Phys. Rev. Lett. 71 3939 [4] Beiersdorfer P 1995 Nucl. Instrum. Meth. Phys. Res. B 99 114–116 [5] Franzke B 1987 Nucl. Instrum. Meth. Phys. Res. B 24-25 18–25 [6] Trassinelli M, Kumar A, Beyer H F, Indelicato P, Märtin R, Reuschl R and Stöhlker T 2009 J. Phys. CS 163 012026 [7] Indelicato P 2008 unpublished [8] Kozhedub Y and Shabaev V 2008 unpublished [9] Artemyev A N, Shabaev V M, Yerokhin V A, Plunien G and Soff G 2005 Phys. Rev. A 71 062104 (pages 26) [10] Drake G 1988 Can. J. Phys. 66 586 [11] Chen M H, Cheng K T and Johnson W R 1993 Phys. Rev. A 47 3692 [12] Plante D, Johnson W and Sapirstein J 1994 Phys. Rev. A 49 3519–3530