arXiv:1108.1668v1 [astro-ph.HE] 8 Aug 2011

INTEGRAL observations of the γ-ray binary 1FGL J1018.6-5856

Jian Li^1, Diego F. Torres^{2,3}, Yupeng Chen^1, Diego Götz^4, Nanda Rea^3, Shu Zhang^1, G. Andrea Caliandro^3, Jianmin Wang^{1,5}

ABSTRACT

The Fermi-LAT collaboration has recently reported that one of their detected sources, namely, 1FGL J1018.6-5856, is a new gamma-ray binary similar to LS 5039. This has prompted efforts to study its multi-frequency behavior. In this report, we present the results from 5.78-Ms INTEGRAL IBIS/ISGRI observations on the source 1FGL J1018.6-5856.

By combining all the available INTEGRAL data, a detection is made at a significance level of 5.4σ in the 18–40 keV band, with an average intensity of 0.074 counts s^{−1}. However, we find that, there is non-statistical noise in the image that effectively reduces the significance to about 4σ and a significant part of the signal appears to be located in a 0.2-wide phase region, at phases 0.4–0.6 (where even the corrected significance amounts to 90% of the total signal found). Given the scarcity of counts, a variability is hinted at about 3σ at the hard X-rays, with an anti-correlation with the Fermi-LAT periodicity. Should this behavior be true, it would be similar to that found in LS 5039, and prompt observations with TeV telescopes at phases anti-correlated with the GeV maximum.

Subject headings: X-rays: binaries, X-rays: individual (1FGL J1018.6-5856)

1. Introduction

The Fermi Large Area telescope (Fermi-LAT) is a pair-production detector with large effective area (∼ 8000 cm^2 on axis for E > 1 GeV) and field of view (∼ 2.4 sr at 1 GeV),

1Laboratory for Particle Astrophysics, Institute of High Energy Physics, Beijing 100049, China.

2Institució Catalana de Recerca i Estudis Avançats (ICREA).

3Institut de Ciències de l’Espai (IEEC-CSIC), Campus UAB, Torre C5, 2a planta, 08193 Barcelona, Spain

4AIM (UMR 7158 CEA/DSM-CNRS-Université Paris Diderot) Irfu/Service d’Astrophysique, Saclay, 91191 Gif-sur-Yvette Cedex, France

5Theoretical Physics Center for Science Facilities (TPCSF), CAS, China

– 2 –

sensitive to gamma rays in the energy range from 20 MeV to > 300 GeV (Atwood et al. 2009). Precisely because of its capability of covering a wide region of the sky, its normal mode of operation is surveying, which facilitates serendipitous discoveries and simultaneous observations of many sources. The Fermi-LAT collaboration has recently released (Corbet et al. 2011) the results for continuing data analysis of the gamma-ray emission from 1FGL J1018.6-5856, for which earlier information was also reported in the Fermi-LAT source catalog (Abdo et al., 2010). The considered data, obtained between MJD 54682 and 55627 in the energy range 100 MeV to 200 GeV show the presence of periodic modulation with a period of 16.58 ± 0.04 days, and an epoch of maximum gamma-ray flux at MJD 55403.3 ± 0.4 (Corbet et al. 2011). A coincident X-ray flux was found using Swift-XRT observations, which features also a high degree of variability, with the 0.3–10 keV count rates ranging from approximately 0.01 to 0.05 counts/s, as well as a star of magnitude B2 which in turn coincides with the Swift-XRT detection. Based on all of the former, Corbet et al. (2011) reported that 1FGL J1018.6-5856 is a new gamma-ray binary like, for instance, LS 5039 (see Abdo et al. 2009). In this Letter we present the results of the analysis of 5.78-Ms INTEGRAL IBIS/ISGRI data on the source 1FGL J1018.6-5856.

2. Observations and data analysis

INTEGRAL (Winkler et al. 2003) is optimized to work between 15 keV–10 MeV. Its main instruments are the IBIS (15 keV–10 MeV; Ubertini et al. 2003) and the Spectrometer on board INTEGRAL (SPI, 20 keV–8 MeV; Vedrenne et al. 2003). At the lower energies (15 keV–1 MeV), the cadmium telluride array ISGRI (Lebrun et al. 2003) of IBIS has a better continuum sensitivity than SPI below ∼ 300 keV. The INTEGRAL observations were carried out per pointing, called as individual Science Windows (SCWs), with a typical time duration of about 2000 s each. The data reduction was performed by using the standard Online Science Analysis (OSA), version 9.0. The results were obtained by running the pipeline from the raw to the image level. In this analysis, only IBIS/ISGRI public data are taken into account. The available INTEGRAL observations when 1FGL J1018.6-5856 had offset angle less than 14^o comprise about 2014 SCWs, adding up to a total exposure time of 5.78 Ms. Our dataset covers rev. 30–867, from 2003-01-11 to 2009-11-20 (MJD 52650- 55155). This large amount of data allow for an in-depth investigation on the hard X-ray emission from 1FGL J1018.6-5856.

– 3 –

Fig. 1.— Mosaic image of the 1FGL J1018.6-5856 sky region, derived by combining all ISGRI data in the 18–40 keV band. The strongest source is GRO J1008-57 whereas the faintest one, visible only in the image is 1FGL J1018.6-5856. The significance level is given by the color scale, with the contours start at 3σ, and following steps of 1σ. The position of 1FGL J1018.6-5856 (magenta) as well as its updated center following the 2FGL Fermi-LAT Catalog (blue)^1are shown, while the cross represent the counterparts identified using XRT (from Corbet et al. 2011).

3. Results

An INTEGRAL detection of 1FGL J1018.6-5856 is derived from combining all the ISGRI data, with a significance level of 5.4σ and an average intensity of 0.074 counts s^{−1} in the 18–40 keV band. 1FGL J1018.6-5856 is also consistently detected in the 18–60 keV; its map significance is reduced only to a fluctuation at higher energies. We only obtain 1.63σ in the 40–100 keV. The significance and flux measurement of 1FGL J1018.6-5856 are obtained from the pixel comprising the most prominent position determined by Swift-XRT (Corbet et al. 2011), which is within Fermi-LAT 1FGL and 2FGL error circle. The pixel size of INTEGRAL is about 4.93 arcmin × 4.93 arcmin, whereas the uncertainty in position of Fermi, i.e., the 95% confidence radius is ∼1.76 arcmin and is thus fully included in the pixel used for our significance estimation. However, we would like to notice that the source significance should be taken with care. The pixel significance distribution of each 18-40 keV map has a Gaussian

1 See the website: http://fermi.gsfc.nasa.gov/ssc/data/access/lat/2yr_catalog/ for more information on 2FGL Fermi-LAT Catalog.

– 4 –

shape with a width parameter, instead of 1 as expected from a purely statistical dominated image, of about 1.1, which may due to an unknown systematic error. Typically, systematic noise is produced from being close to the very bright sources and or very crowded regions. As more maps from different observations are combined, the width parameter increases and finally reaches up to 1.4 for all data considered. Thus, we find that there is a non-statistical noise in the image that effectively reduces the significance to 5.4/1.4, or about 4σ. Given the spatial coincidence of the source with 1FGL J1018.6-5856 we can claim a detection at 99.9937 %, or alternatively, that the probability of a chance coincidence is of the order ∼ 6.3 × 10^{−5}.

If we assume (although there is no a prior reason to, and we caveat that this is just done for estimation to an order of magnitude) that the spectral shape of 1FGL J1018.6-5856 is same with that of the Crab nebula in the corresponding energy range (a power-law with Γ ∼2.14), a flux of 1FGL J1018.6-5856 is derived as 2.25 × 10^{−11} erg cm^{−2} s^{−1}, or about 0.35 mCrab in flux units. If we instead assume that the spectrum of 1FGL J1018.6-5856 is similar to that of LS 5039 at inferior conjunction passage as given by Hoffmann et al. (2009), we would obtain 1FGL J1018.6-5856 flux of about 0.75 × 10^{−11} erg cm^{−2} s^{−1}, or a factor of 0.23 of the LS 5039 flux. The neighboring source GRO J1008-57, 1.36^∘ away from 1FGL J1018.6- 5856 is detected with a significance of 54.6σ and with an intensity of 4.2 mCrab. It likely constitutes a problem for the analysis of 1FGL J1018.6-5856 with non-imaging detectors.

Since 1FGL J1018.6-5856 is much weaker than other neighboring sources in its crowded sky region, it is impossible for OSA 9.0 to derive a lightcurve directly out of the standard reduction procedure. However, one can combine the images from different science windows based on orbital phase-bins and, via inferring the flux from each of the combined image, produce an orbital lightcurve manually. Thus, to see how 1FGL J1018.6-5856 varies along its 16.58 days orbit, we divide the INTEGRAL data into phase bins. The reference time at phase zero is set to the peak flux that observed by Fermi-LAT at T_{max} = MJD 55403.3 ± n × 16.58 days, as reported at GeV energies in Corbet et al. (2011). We show the INTEGRAL results

Table 1: Exposure times and obtained significance for the whole INTEGRAL observation (all phase bins) and separated in orbital bins.

phase flux significance exposure width of combined sig.

(counts s^{−1}) (in 18–40 keV) (Ms) map distribution 0.0–1.0 0.074±0.014 5.4 5.78 1.39 0.0–0.2 -0.0073±0.032 – 1.16 1.36 0.2–0.4 0.094±0.030 3.12 1.13 1.32 0.4–0.6 0.154±0.031 4.89 1.13 1.37 0.6–0.8 0.050±0.032 1.54 1.05 1.30 0.8–1.0 0.061±0.028 2.15 1.31 1.36

– 5 –

on 1FGL J1018.6-5856 for each phase bin in Table 1, where the flux, the corresponding exposure and the significance are provided. Again, given that the pixel distribution has a Gaussian width of about 1.34 in each of the images (see Table 1), we conservatively consider that the significance should be lowered by this factor. Hinted from Table 1 is a trend of having an anti-correlation between the hard X-ray emission and the Fermi-LAT periodicity. Actually, we find that a significant portion of the signal comes only from a 0.2-wide phase region, at phases 0.4–0.6 (where even the corrected significance amounts to about 90% of the signal found in total). However, the scarcity of counts makes it difficult to have a definitive proof of the variability: a constant fit to the count rate yields a reduced χ^2 of 14.09/4, suggesting that the significance of variability is at 99.64%, or only 2.7σ level.

Though it is impossible to derive a lightcurve from standard reduction procedure, we could read pixels corresponding to 1FGL J1018.6-5856’ position and derived a light curve manually. To search for a periodic signal in the light curve data, we used the Lomb–Scargle periodogram method. Power spectrum is generated for the light curve using the PERIOD subroutine (Press & Rybicki 1989). No significant signal is seen at an orbit period of 16.58 days beyond 90% white–noise confidence level. This is consistent with having only an overall weak detection of the source in our imaging analysis and the orbit modulation is not apparent in lightcurve.

4. Concluding remarks

We have carried out an analysis of all INTEGRAL data available to 1FGL J1018.6- 5856, a new gamma-ray binary with a period of ∼ 16.5 days discovered blindly by means of a power spectrum analysis of Fermi-LAT detection (100 MeV–200 GeV). The total effective exposure extracted on the source from the archive amounts to 5.78 Ms, and leads to a credible detection of the source at hard X-rays (18–40 keV). The count rate is however very low, preventing from extracting strong conclusions about orbital variability, although it is hinted with an anti-correlation with the gamma-ray emission detected by Fermi-LAT in 100 MeV – 200 GeV. In fact, 1FGL J1018.6-5856 seems to significantly show up only during a small part of its orbital evolution, far from the gamma-ray maximum at 100 MeV–200 GeV. This would represent a more marked distinction with respect to what was obtained in the case of LS I +61^∘303 which presents a displacement of the maximum between hard X-rays (by INTEGRAL) and gamma-rays (by Fermi-LAT and MAGIC), without being completely anti-correlated (Zhang et al. 2010). Instead this is in line with the results for LS 5039 (see, e.g., Hoffman et al. 2009) where the hard X-ray emission as measured with INTEGRAL is correlated with the TeV emission measured with HESS (Aharonian et al. 2006), and thus it

– 6 –

is fully anti-correlated with the GeV emission as measured by Fermi-LAT (Abdo et al. 2009). The case of 1FGL J1018.6-5856 appears as another incarnation of this behavior, albeit with the conservative caveat of yet a low significance for an strong claim —the maximum count rate of 1FGL J1018.6-5856 is about five times lower than that of LS 5039—, emphasizing a possible physical similarity of the two sources. TeV observations at what appears to be the maximum of the hard X-ray lightcurve are thus encouraged.

We acknowledge support from the grants AYA2009-07391 and SGR2009-811, as well as the Formosa Program TW2010005. NR is supported by a Ramon y Cajal Fellowship. This work was also subsidized by the National Natural Science Foundation of China via NSFC-10325313,10521001,10733010,11073021 and 10821061, the CAS key Project KJCX2- YW-T03, and 973 program 2009CB824800

REFERENCES Abdo A. et al., 2009, ApJ, 706, L56 Abdo A. et al., 2010, ApJS, 188, 405 Aharonian, F. A. , et al. 2006, A&A, 460, 743 Atwood, W. B., et al. 2009, ApJ, 697, 1071 Corbet R. et al. 2011, ATel, 3221 Hoffmann A. D. et al. 2009, A&A, 494, L37 Ubertini P. et al., 2003, A&A, 411, L131 Press, W. H., & Rybicki, G. B. 1989, ApJ, 338, 277 Vedrenne G. et al., 2003, A&A, 411, L63 Winkler C. et al., 2003, A&A, 411, L1 Zhang, S., Torres, D. F., Li, J., Chen, Y. P., Rea, N., & Wang, J. M. 2010, MNRAS, 408, 642

This preprint was prepared with the AAS L^ATEX macros v5.2.