arXiv:1202.6628v1 [physics.acc-ph] 29 Feb 2012

Muon Background Reduction in CLIC

L. C. Deacon^1, G. Blair^2 and H. Burkhardt^1

1- CERN Meyrin, Geneva - Switzerland 2- Royal Holloway, University of London Egham Hill, Egham, Surrey - United Kingdom

We report on a study concerning the reduction of muon backgrounds in CLIC using magnetised iron.

1 Introduction

We previously reported on a study of muon backgrounds in CLIC [1]. Subsequently, the CLIC detector group reported that such muon fluxes would result in a muon background which would critically degrade the performance of the detector [2]. Here, we report on a study of how introducing magnetised toroids in the beam delivery system would affect the flux of muons hitting the detector. As in [1], the tracking was done in two stages: firstly, a halo distribution was generated using HTGEN-PLACET [3], [4]. This was then tracked from the first vertical betatron spoiler to the detector using BDSIM [5], including electromagnetic and muon production processes in the simulation.

2 Simulation procedure

2.1 Halo generation and tracking

The types of processes contributing to halo formation [6] include particle processes and optics related processes. The particle processes contributing to halo formation include beam-gas scattering (both elastic and inelastic) and thermal photon scattering. Estimates of the effects of these processes exist. Optics-related processes include mismatch, coupling, dispersion and non-linearities. These would require tracking with a realistic machine. Tracking has so far been done with a perfect machine only. Various other processes exist such as noise and vibrations, dark current and wakefields, whose effect on the amount of halo has not yet been calculated. By experience, the amount of actual halo is very hard to predict and may vary considerably in a given machine.

We assume that the beams are cleaned before entering the linac so we only need to consider the extra halo produced in the linac and BDS. The HTGEN code was used to generate halo by beam-gas scattering. (Mott scattering) and inelastic scattering (bremsstrahlung). HTGEN is interfaced with PLACET, which allows halo tracking alongside tracking the core of the beam.

The 2007 estimate of the linac beam gas pressure was 10 nTorr. In light of the results presented in [1], and because of requirements related to beam stability, this was updated to 1 nTorr. Together with a larger emittance, this reduced the total linac probability of beam gas scattering by a factor of 13, so that we would now expect 1.5 × 10^{−5} of the electrons to be lost in the spoilers^a. Work is ongoing to update and improve the halo simulations.

aA recent analysis seems to indicate that the fraction of electrons hitting the collimators is significantly lower than the estimates presented here. The muon flux to the detector decreases proportionally.

2.2 BDSIM

BDSIM [5] is a toolkit based on Geant4 [7], thus giving access to many electromagnetic and hadronic interaction models as well as a powerful geometry description framework. On top of this, fast particle tracking routines and some additional physics processes are introduced, and a high level geometry description language is added. An interface to PLACET has also been developed in order to combine PLACET’s wake-field effects on the beam halo, with BDSIM’s capability for secondary generation and tracking. Details of the simulated geometry and physics processes are given in [1]

2.3 Muon spoilers

Muon spoilers were introduced in the simulation. The somewhat simplified geometry used in the simulation consists of iron cylinders with an outer radius of 55 cm, a 1 cm inner radius, with a 1.5 Tesla solenoid field within the cylinder. The muon spoilers are placed 100m downstream of each of the four sets of betatron collimators, to allow the muon distribution to expand before hitting the spoilers, and have a total length of 80m. The details of the lengths and locations are given in table 1.

3 Muon estimates

Muon spoiler Z [m] Length [m] MS1a 99 8 MS1b 117 8 MS2a 211 9 MS2b 229 9 MS3a 323 11 MS3b 341 11 MS4a 406 14 MS4b 435 14

Table 1: Muon spoiler lengths and locations. Here Z is the distance along the reference trajectory from the start of the first vertical spoiler YSP1 to the start of the muon spoiler.

In [1] we reported an estimated muon flux of 2 × 10^6 muons per train, many of which would be seen as background in the detector, and that reducing the muon flux would require magnetised shielding. In the full simulation, the number of muons per bunch hitting the detector was reported as 207±2.

The CLIC detector CDR states that at the level of 1 muon per bunch crossing does not constitute an important problem for the detector [2]. A factor 13 improvement is given by reducing the linac beam gas pressure from 10 nTorr to 1 nTorr. Further improvement would be needed to reduce the muon flux to an acceptable level.

With the muon spoilers added, as described in 2.3, the flux is reduced by a further factor of 10.

4 Optimisation

4.1 First Iteration

To further reduce the muon flux to the detector, the origins of the remaining muons were analysed. A histogram of Z_0 was plotted, Figure 1, where Z_0 is the location at which a muon was created, for all muons reaching the detector, in terms of distance from the first muon spoiler YSP1 along the reference particle trajectory. Four peaks can be seen, which correspond to the locations of the betatron collimators. There is an additional, wider peak

Figure 1: Origin or location of last scatter of muons hitting the detector (within 6 m radius at the final focus quadrupole) with no muon spoilers. The area under the histogram is normalised to 1.

Figure 2: As Figure 1, but with muon spoilers. The area under the histogram is normalised to 1.

corresponding to a long dipole, from ∼ 600− ∼ 800 m, which is attributed to muons hitting this dipole and producing further particles. These results suggested that the addition of a magnetised tunnel filler at ∼ 625 m downstream of the first vertical betatron spoiler could help reduce the muon background further.

4.2 Second Iteration

An outer radius 3.5 m, inner radius 1 cm, 17 m long tunnel filler was added to the simulation starting at s = 644 m. This simulation showed that the addition of the tunnel filler would improve the muon flux by a further factor of 1.5, and its Z_0 histogram, figure 3, suggested that the muons seemed to be generated in the long dipole section.

4.3 Third iteration

All available drift spaces were filled with magnetised tunnel fillers - 3.5 m outer radius - and the flux was found to be similar to the second iteration. We conclude that adding more magnetised iron beyond that in the second iteration will probably not reduce the muon flux any further. 90% of the remaining muons are created in the long dipole section. Particles

Figure 3: As Figure 1, but with muon spoilers and tunnel filler. The area under the histogram is normalised to 1.

Figure 4: Origins of muons created in the final focus dipole by secondary electrons, positrons and photons from the beam delivery system collimation system. Z_0 = 0 corresponds to the start of final focus dipole magnet BFF3. The area under the histogram is normalised to 1.

inside the beam pipe were tracked from the start of final focus dipole BFF3. The origin of muons hitting the detector in distance from the start of BFF3 (not normalised) is shown in Fig. 4. From left to right, the three peaks correspond to the impacts of positrons, photons and electrons, respectively.

The positrons contribute ∼ 20% to the muon flux, the photons ∼ 75% and the electrons ∼ 5%. These secondary particles were originally created upstream in the apertures of the beam delivery system. There is not enough space in which to deflect the muons created by these secondaries in the final dipole.

5 Conclusion

Work is ongoing to provide a new set of HTGEN-PLACET simulations of the linac-BDS system. These will provide better estimates of the halo to input into the BDSIM simulation. There is a predicted factor 13 reduction in the halo after reducing the beam gas pressure in the linac from 10 nTorr to 1 nTorr and a larger emittance. With the addition of the muon spoilers outlined above, plus the tunnel filler, the muon flux is reduced by a factor of 15. With the muon spoilers alone, this is a factor of 10. These reductions combine to give a predicted 1.5 muons per beam per bunch crossing. Most of the remaining muons are created in the final focus dipoles from secondary positrons and photons from further upstream - these could possibly be reduced by improving the collimation system. With further improvements, a muon flux of 1 per bunch crossing, requested by the detector, seems feasible. Further optimisation of the muon spoiler system may be needed.

References

[1] Helmut Burkhardt, Grahame A. Blair, and Lawrence Deacon. Muon Backgrounds in CLIC. Conf.Proc., C100523:THPD014, 2010.

[2] Lucie Linssen, Akiya Miyamoto, Marcel Stanitzki, and Harry Weerts. Physics and Detectors at CLIC:

CLIC Conceptual Design Report. 2012.

[3] H Burkhardt et al. User Manual for the Halo and Tail Generator HTGEN. (EUROTeV-Memo-2008-003), 2008.

[4] A. Latina et al. Recent Improvements in the Tracking Code PLACET. EPAC’08, 11th European Particle Accelerator Conference, 23- 27 June 2008, Genoa, Italy.

[5] I. Agapov, G. A. Blair, S. Malton, and L. Deacon. BDSIM: A particle tracking code for accelerator beamline simulations including particle-matter interactions. Nucl. Instrum. Meth., A606:708–712, 2009.

[6] H Burkhardt et al. Halo and Tail Generation Computer Model and Studies for Linear Colliders.

(EUROTeV-Report-2008-076), 2008.

[7] S. Agostinelli et al. GEANT4: A simulation toolkit. Nucl. Instrum. Meth., A506:250–303, 2003.