arXiv:1203.5305v1 [physics.acc-ph] 23 Mar 2012

A fast high-order method to calculate wakefield forces in an electron beam

Ji Qiang, Chad Mitchell, Robert D. Ryne Lawrence Berkeley National Laboratory, 1 Cyclotron Road, Berkeley, CA 94720

In this paper we report on a high-order fast method to numerically calculate wakefield forces in an electron beam given a wake function model. This method is based on a Newton- Cotes quadrature rule for integral approximation and an FFT method for discrete summation that results in an O(Nlog(N)) computational cost, where N is the number of grid points. Using the Simpson quadrature rule with an accuracy of O(h^4), where h is the grid size, we present numerical calculation of the wakefields from a resonator wake function model and from a one-dimensional coherent synchrotron radiation (CSR) wake model. Besides the fast speed and high numerical accuracy, the calculation using the direct line density instead of the first derivative of the line density avoids numerical filtering of the electron density function for computing the CSR wakefield force.

I. INTRODUCTION

The wakefield forces from the interaction of electrons with external materials and from the interactions of electrons inside the beam through radiation have significant effects on the electron beam quality for next generation light sources. Those wakefields can cause the loss of beam energy, increase the beam energy spread, increase beam emittance through the magnetic bunch compressor, and drive microbunching instability through the linac. Including the wakefield effects in a beam dynamics tracking code is crucial for designing a beam delivery system for next generation light sources and has been included in a number of tracking codes [1–4].

The numerical calculation of the wakefield forces on electrons involves calculating a convolution between the wake function and the charge density of the beam. The direct numerical calculation of the convolution for the wakefield has a computational cost scaling as O(N^2), where N is the number of grid points in the computational domain. Fortunately, such a discretized convolution summation on a uniform grid can be calculated using a cyclic summation on a doubled computational domain using an FFT based method [5–8]. This reduces the computational cost from O(N^2) to O(Nlog(N)). In our previous study, we have developed a high-order FFT based method to numerically calculate the convolution with a smooth kernel [9]. In this paper, we extend the previous study by applying a high-order Simpson quadrature rule to the wakefield convolution with finite discontinuity of the kernel. We then apply this method to the calculation of the wakefields from an external resonator wake function (an approximation to the AC resistance wall wake function) and from a steady-state CSR wake function.

The organization of the paper is as follows: after a brief introduction, we present the computational method in Section 2, application examples to calculate the wakefield forces from an external resonator wake function and from a steady-state CSR wake function in Section 3, and final summary in Section 4.

II. COMPUTATIONAL METHOD

We consider the longitudinal wakefield on an electron at longitudinal location z inside an electron beam can be written as E(z) = ∫_∞ −∞ W (z − z^′)ρ(z^′)dz^′ (1) where W is the wake function from the interaction of electrons with external materials such as resistive wall wake or the interaction among electrons themselves such as the coherent synchrotron radiation (CSR) inside a bending magnet, and ρ is the beam line density distribution. For the external wake function, the variable z stands for ct, where t is the time of flight difference with respect to the head of the beam, and c is the speed of light in vacuum. For the CSR wake function, the variable z stands for the longitudinal spatial position. The above convolution integral can be written as the summation of M equal subinterval integrals: E(z) = M∑ i=1 ∫_z′_{i+1} z^′_i W (z − z^′)ρ(z^′)dz^′ (2)

where z^′_i = (i − 1)(z/M), i = 1, · · · , M. For the integral between z^′_i and z^′_{i+1}, the closed Newton- Cotes formula of degree k at k + 1 equally spaced points can be written as ∫_z′_{i+1} z^′_i W (z − z^′)ρ(z^′)dz^′ ≈ k∑ j=0 w_j W (z − z^′_j )ρ(z^′_j ) (3)

where z^′_j = z^′_i +jdz, dz = z/(kM), and the weight w_j is associated with integral of the j_{th} Lagrange basis polynomial. For k = 1, this is known as the trapezoidal quadrature rule; for k = 2, this is the Simpson rule; for k = 3, Simpson’s 3/8 rule; for k = 4, Boole’s rule, etc [10, 11]. Using the extended three-point Simpson rule on a uniform grid, the above convolution integral can be approximated as E(z) = Ē(z) + O(h^4) (4) where h is the grid size, and Ē(z) is the numerical approximation of the convolution integral. For a grid point z_i, if i is an odd number, the Simpson quadrature rule yields

Ē(z_i) = 1 3 h(f_1 + 4 (i−1)/2 ∑ j=1 f_{2j} + 2 (i−1)/2 ∑ j=2 f_{2j−1} + f_i) (5)

if i is an even number, it yields

Ē(z_i) = 1 3 h(3f_1/2 + 5f_2/2 + 2 (i−2)/2 ∑ j=2 f_{2j} + 4 i/2∑ j=2 f_{2j−1} + f_i) (6)

where the kernel function f is given by

f(z, z^′) = W (z − z^′)ρ(z^′) (7)

and f_j(z_i) = f(z_i, z^′_j ) with z^′_j = (j − 1)h. The above numerical summation can be rewritten as

Ē(z_i) = 1 3 h N∑ j=1 W̄ (z_i − z_j )ρ̄(z_j ) + 1 3 hW (0)ρ(z_i) (8)

with

ρ̄(z_j ) = ρ(z_j ) : j = 1 4ρ(z_j ) : j = 2l 2ρ(z_j ) : j = 2l − 1 (9)

for odd grid number i, and

ρ̄(z_j ) =

3ρ(z_j )/2 : j = 1 5ρ(z_j )/2 : j = 2 2ρ(z_j ) : j = 2l 4ρ(z_j ) : j = 2l − 1

(10)

for even grid number i, and the modified wake function W̄ is given by

W̄ (z) =

W (z) : z > 0

0 : z ≤ 0

(11)

The direct calculation of the above summation requires O(N) operations for a single point z_i, where i = 1, · · · , N. To obtain the convolution for all N points on the grid, the total computational cost will be O(N^2). Fortunately, the above convolution summation can be replaced by a cyclic summation in the double-gridded computational domain:

Ē_c(z_i) = 1 3 h 2N∑ j=1 W̄_c(z_i − z_j )ρ̄_c(z_j ) (12) where i = 1, · · · , 2N, j = 1, · · · , 2N and

ρ̄_c(z_j ) = ρ̄(z_j ) : 1 ≤ j ≤ N 0 : N < j ≤ 2N (13)

W̄_c(z_k) =

W̄ (z_k) : 1 ≤ k ≤ N; W̄ (−z_{2N+2−k}) : N < k ≤ 2N; (14)

where the new density function ρ̄_c(z) and the new wake function W̄_c(z) have the properties:

ρ̄_c(z) = ρ̄_c(z + 2(L + h)) (15) W̄_c(z) = W̄_c(z + 2(L + h)) (16)

where L = (N − 1)h. From above definition, one can show that the cyclic summation gives the same value as the convolution summation within the original domain, i.e. Ē(z_i) = Ē_c(z_i) for i = 1, N. (17)

In the cyclic summation, the kernel is a discrete periodic function in the doubled computational domain. This cyclic summation can be calculated using the FFT method, i.e. Ē_c(z_i) = InvFFT (Ē_c(ω)) (18)

Here, InvFFT denotes the inverse FFT of the function Ē_c(ω) that is given by Ē_c(ω) = W̄_c(ω) ρ̄_c(ω) (19)

where W̄_c(ω) and ρ̄_c(ω) denote the forward FFT of the function W̄_c and the ρ̄_c respectively. The computational operations required to calculate cyclic summation using the above FFT method is of O(Nlog(N).

III. APPLICATION EXAMPLES

As an illustration, we use the above method to calculate the wakefields inside an electron beam from a resonator wake function and from the CSR wake function. The resonator wake function is given as [12] W (s) = 4 a^2 exp(−(s/s_0)/Γ) cos((8/Γ)^{1/4}(s/s_0)); for s ≥ 0 (20)

where s = z − z^′ is the separation between the observation point and the source point, s_0 = (2a/(Z_0σ))^{1/3} is the characteristic length of the wake, a is the radius of the pipe, σ is the conductivity of the pipe material, Z_0 is the vacuum impedance, Γ = cτ/s_0 is the normalized relaxation

FIG. 1: The wakefield force as a function of bunch length coordinate in an electron beam inside a Copper pipe with resonator wake function.

FIG. 2: The errors at the center of the electron beam as a function grid points. The red line is from the Simpson quadrature rule and the green line is from the trapzoidal rule.

time, and τ is the relaxation time. This wake function provides a good approximation to the AC resistive wall wake function at large Γ [12].

Figure 1 shows the normalized wakefield in an electron beam moving inside a Copper pipe (Γ = 1) computed using the above algorithm. The beam has an rms bunch length of 1.5s_0 and a Gaussian current distribution. The electron beam loses energy to the wall due to the resistance of the conducting pipe. To verify the accuracy of the above algorithm, Figure 2 shows the errors of the calculated wakefield at the center of the bunch as a function of the number of grid points. As a comparison, we also give the errors using the trapezoidal quadrature rule. As expected, the above Simpson rule method converges much faster than the trapezoidal rule based method. The accuracy of the Simpson rule calculated wakefield increases by more than an order of magnitude as the number of grid points doubles.

Another application example of above numerical method is to calculate the wakefield force from

FIG. 3: The CSR wakefield as a function of bunch length coordinate in an electron beam.

the one-dimensional steady state CSR wake. The one-dimensional CSR wake function is given as [13]

W (u(s)) = 1 4πϵ γ^4 R^2 { u^2/4 − 1 2(1 + u^2/4)^3 + 1/6 − u^2/18 − u^4/64 (1 + u^2/4)^3(1 + u^2/12)^2)

} (21) and u(s) = ( √ 64 + 144s̄^2 + 12s̄)^{1/3} − ( √ 64 + 144s̄^2 − 12s̄)^{1/3} (22)

where s̄ =^{sγ3}_R is the normalized longitudinal separation between the source point and the observation point, R is the radius of the bending magnet, and γ is the relativistic factor of the electron beam. The direct application of the above method with different number of grid points is shown in Fig. 3 for a 1 nC Gaussian beam with 10 micron rms bunch length at 100 MeV. It is seen that a few thousand grid points are needed in order to obtain a numerically converged wakefield.

FIG. 4: The steady-state CSR wake function as a function of separation between the observation point and the source point.

This large number of grid points is needed due to the sharp variation of the CSR wake function around s = 0 as shown in Fig. 4. It is seen that outside this short range (about a few micron in this example) around zero, the CSR wake function is much smoother and can be approximated by an asymptotic function s^{−4/3}. Recently, an integrated Green function method with linear basis was proposed to treat the CSR wake function including the short range effect [14]. Here, we propose a modified Simpson rule method by separating the range of the original CSR wake function into two regions: one small region around the zero covering the short range CSR interaction, and the remainning region covering the long range interaction. The integral for the CSR wakefield can be written as: E(z) = ∫_{z−δz} −∞ W (z − z^′)ρ(z^′)dz^′ + ∫_z z−δz W (z − z^′)ρ(z^′)dz^′ (23)

where δz is a small distance around the zero to separate the long-range CSR interaction from the short-range interaction. The first integral in the above equation can be calculated using a Simpson quadrature rule as shown in the previous section. Using the parameters in the above example with δz = 3.2 um and the Simpson quadrature rule, we calculated the errors at the center of the bunch as a function of the number of grid points for the first integral in Eq. 23. The results are shown in Fig. 5. As expected, the error of the integral decreases by more than an order of magnitude as

FIG. 5: The errors at the center of the bunch as a function of grid points for the first integral in Eq. 23 using the Simpson rule.

the number of the grid points doubles.

The second integral in the Eq. 23 will be calculated using an integrated Green’s function method with constant current density basis functions given the fact that the CSR wake function varies sharply while the line density changes slowly inside such a short-range interval. At each grid point z_i, the interval [z_i − δz, z_i] is subdivided into N_{int} number of sub-intervals with a length h_{int} = δz/(N_{int} − 1). This integral can now be rewritten as: ∫_{zi} z_i−δz W (z_i − z^′)ρ(z^′)dz^′ = ∫_{z1+hint/2} z_1

W (z_i − z^′)ρ(z^′)dz^′ + i−1∑ j=2 ∫_{zj +hint/2} z_j −h_{int}/2 W (z_i − z^′)ρ(z^′)dz^′

+ ∫_{zi} z_i−h_{int}/2 W (z_i − z^′)ρ(z^′)dz^′ (24)

where z_1 = z_i −δz. Since the δz is small (O(μm)), only a small number of sub-intervals are needed. Assuming that the current density is constant within each sub-interval, the above integral can be approximated as: ∫_{zi} z_i−δz W (z_i − z^′)ρ(z^′)dz^′ = ρ(z_1) ∫_{z1+hint/2} z_1

W (z_i − z^′)dz^′ + i−1∑ j=2 ρ(z_j ) ∫_{zj +hint/2} z_j −h_{int}/2 W (z_i − z^′)dz^′ +ρ(z_i) ∫_{zi} z_i−h_{int}/2 W (z_i − z^′)dz^′ (25)

The integral with respect to the wake function in above equation can be done numerically if an analytical solution is not available. Fortunately, in the case of the steady-state CSR wake function, there exists an analytical solution for the integral of the wake function [15], i.e. ∫_{zj +hint/2} z_j −h_{int}/2 W (z − z^′)dz^′ = [ν(A(z − z_j + h_{int}/2)) − ν(A(z − z_j − h_{int/2}))]/A (26) where ν(u) = − eγ^4 4πϵR^2 3 4 {− 2 u + 1 u √ u^2 + 1

(Ω^{1/3} + Ω^{−1/3}) + 2 √ u^2 + 1

(Ω^{2/3} − Ω^{−2/3})} (27)

and Ω = u + √ u^2 + 1, and A = 3γ^3/(2R). Using this modified Simpson rule, we recalculated the CSR wakefield inside the electron beam using 10 sub-intervals inside the short range around 0 and 127 grid points for the rest of the region. The results are shown in Fig. 6 together with the direct Simpson rule calculation using 8191 grid points. It is seen that the wakefield from the modified

FIG. 6: The CSR wakefield as a function of bunch length coordinate in an electron beam with the modified Simpson rule (137 grid points) and the direct Simpson rule (8191 grid points).

Simpson rule agrees with the high resolution direct Simpson rule very well even with only 137 grid points.

IV. SUMMARY

In this paper, we present a fast high-order method for numerical calculation of the wakefield on electrons inside an electron beam. Using the Simpson quadrature rule, we present examples to calculate the wakefields from the resonator wake function and from the CSR wake function. These examples can have O(h^4) accuracy with a O(Nlog(N)) computational cost. Besides the fast speed and potential high numerical accuracy, the above CSR wakefield calculation also uses the direct line density instead of the first derivative of the line density with numerical filtering of the density as suggested in Reference [16]. This paper gives application examples to the calculation of the longitudinal wakefield for an electron beam. The same method can also be applied to the calculation of the transverse wakefields inside an electron beam using a modified density function.

Acknowledgements

This research was supported by the Office of Science of the U.S. Department of Energy under Contract No. DE-AC02-05CH11231. This research used resources of the National Energy Research Scientific Computing Center.

[1] J. Qiang, R. D. Ryne, S. Habib, V. Decyk, J. Comp. Phys. vol. 163, 434, (2000). [2] J. Qiang, R. D. Ryne, M. Venturini, A. A. Zholents, I. V. Pogorelov, Phys. Rev. ST Accel. Beams, 12, 100702 (2009).

[3] M. Borland, ANL Advanced Photon Source Report No. LS-287, 2000. [4] K. Bane, P. Emma, in Proc. of PAC05, p. 4266, 2005.

[5] R. W. Hockney and J. W. Eastwood, Computer Simulation Using Particles, Adam Hilger: New York, 1988.

[6] W. H. Press, B. P. Flannery, S. A. Teukolsky, and W. T. Vetterling,Numerical Recipes in FORTRAN:

The Art of Scientific Computing, 2nd ed. Cambridge, England: Cambridge University Press, 1992. [7] J. Qiang, S. Lidia, R. D. Ryne, and C. Limborg-Deprey, Phys. Rev. ST Accel. Beams 9, 044204 (2006). [8] Robert D. Ryne, On FFT-based convolutions and correlations, with application to solving Poisson’s equation in an open rectangular pipe, arXiv:1111.4971 (2011).

[9] J. Qiang, Comp. Phys. Comm. 18, 313316, (2010).

[10] M. Abramowitz and I. A. Stegun, eds. Handbook of Mathematical Functions with Formulas, Graphs, and Mathematical Tables, New York: Dover, 1972.

[11] http://mathworld.wolfram.com/Newton-CotesFormulas.html.

[12] K. L. F. Bane, “Resistive Wall Wakefield in the LCLS Undulator Beam Pipe,” SLAC-PUB-10707, Revised October 2004.

[13] E. L. Saldin, E. A. Schneidmiller, M. V. Yurkov, Nucl. Inst. Meth. Phys. Res. A 398, pp. 373-394, 1997. [14] R. D. Ryne, B. Carlsten, J. Qiang, N. Yampolsky, “A Model for One-Dimensional Coherent Synchrotron Radiation including Short-Range Effects,” arXiv:1202.2409 (2012).

[15] J. B. Murphy, S. Krinsky, and R. L. Gluckstern, Particle Accelerators, Vol 57, pp. 9-64, 1997. [16] M. Borland, Phys. Rev. Sepecial Topics - Accel. Beams 4, 070701 (2001).