arXiv:1210.3471v1 [astro-ph.CO] 12 Oct 2012

Mon. Not. R. Astron. Soc. 000, 000–000 (0000) Printed 3 December 2017 (MN L^ATEX style file v2.2)

Revised SWIRE photometric redshifts

Michael Rowan-Robinson^1, Eduardo Gonzalez-Solares^2, Mattia Vaccari^{3,4}, Lucia Marchetti^3

1Astrophysics Group, Blackett Laboratory, Imperial College of Science Technology and Medicine, Prince Consort Road, London SW7 2AZ, 2Institute of Astronomy, Madingley Rd, Cambridge CB3 0HA, 3Dipartimento di Fisica e Astronomia ”Galileo Galilei”, Universita du Padova, Vicolo Osservatorio 3, I-35122 Padua, Italy, 4Department of Physics, University of Western Cape, 7535 Belliville, Cape Town, South Africa,

3 December 2017

ABSTRACT We have revised the SWIRE Photometric Redshift Catalogue to take account of new optical photometry in several of the SWIRE areas, and incorporating 2MASS and UKIDSS near infrared data. Aperture matching is an important issue for combining near infrared and optical data, and we have explored a number of methods of doing this. The increased number of photometric bands available for the redshift solution results in improvements both in the rms error and, especially, in the outlier rate.

We have also found that incorporating the dust torus emission into the QSO templates improves the performance for QSO redshift estimation. Our revised redshift catalogue contains over 1 million extragalactic objects, of which 26288 are QSOs.

Key words: infrared: galaxies - galaxies: evolution - star:formation - galaxies: starburst - cosmology: observations

1 INTRODUCTION

Rowan-Robinson et al (2008) reported photometric redshifts for over 1 million galaxies in the Spitzer SWIRE survey (the SWIRE Photometric Redshift Catalogue, hereafter SPRC) and gave a detailed review of earlier work on photometric redshifts. Subsequently new results have been reported by Wolf et al (2008), Brammer et al (2008), Ilbert et al (2009), Salvato et al (2009), and a comparison of photometric redshift methods has been published by by Hildebrandt et al (2010).

The SWIRE Survey consisted of 49 sq deg of sky surveyed by Spitzer at 3.6, 4.5, 5.8, 8.0, 24.0, 70.0 and 160.0 μm. The SWIRE areas in which we had optical photometry and were able to derive photometric redshifts in SPRC were: (1) 8.72 sq deg of ELAIS-N1 (EN1), in which we had 5-band (U’g’r’i’Z’) photometry from the Wide Field Survey (WFC), (2) 4.84 sq deg of ELAIS-N2 (EN2), in which we had 5-band (U’g’r’i’Z’) photometry from the WFS, (3) 7.53 sq deg of the Lockman Hole, in which we had 3-band photometry (g’r’i’) from the SWIRE photometry programme, with U-band photometry in 1.24 sq deg, (4) 4.56 sq deg in Chandra Deep Field South (CDFS), in which we had 3-band (g’r’i’) photometry from the SWIRE photometry programme, (5) 6.97 sq deg of the XMM Large Scale Structure Survey (XMM- LSS), in which we had 5-band (UgriZ) photometry from Pierre et al (2007). (6) 1.5 sq deg of ELAIS-S1, in which we have 3-band (B,V,R) photometry from Berta et al (2007). In addition within XMM we had 10-band photometry (ugrizUBVRI) from the VVDS programme of McCracken et al (2003), Le Févre et al (2005) (0.79 sq deg), and very deep 5-band photometry (BVRi’z’) in 1.12 sq deg of the Subaru XMM Deep Survey (SXDS, Furusawa et al 2008). The SWIRE data are described in Surace et al (2004)^1. The estimated redshifts range from 0 to 6 but the bulk are at z < 1.5.

1 and at http://irsa.ipac.caltech.edu/data/SPITZER/SWIRE/

© 0000 RAS

2 Rowan-Robinson M. et al

The advent of revised INT WFC UgriZ optical fluxes for Lockman, EN1 and EN2 (Gonzalez- Solares et al 2011), the release of CFHT Legacy Survey T0005 MegaCam ugriz optical fluxes for XMM (http://terapix.iap.fr/cplt/oldSite/Descart/CFHTLS- T0005-Release.pdf) and the UKIDSS DR8 release of WFCAM JK fluxes for Lockman, EN1 and XMM-LSS (Lawrence et al. 2007^2), make it worthwhile revisiting the SWIRE photometric redshifts in these areas.

The Spitzer-selected ’data fusion’catalogues compiled by Vaccari et al. (2012 in prep) comprises most publicly available photometric and spectroscopic data such as the above in most fields surveyed by Herschel as part of the HerMES survey (Oliver et al. 2012). TOPCAT^3 was used to merge the SPRC catalogues for Lockman, EN1, EN2 and XMM-LSS with the data fusion catalogues, with a 1.5” search radius, to get the desired photometric data. Not all sources from the original SPRC found matches, mostly because the data fusion selection requires a source to be detected at either 3.6 or 4.5 μm and some 24 μm sources from the original SPRC are thus missing from the data fusion catalogues. Table 1 summarizes the optical and near infrared data available in each SWIRE area.

Rowan-Robinson et al (2008) used optical magnitudes and Spitzer IRAC 3.6 and 4.5 μm fluxes to estimate photometric redshifts. They reported difficulty in incorporating 2MASS and UKIDSS J,H,K magnitudes into the solution,which they attributed to issues of aperture matching. These problems have been solved here. The use of these additional bands, together with the improved optical photometry, has resulted in a reduction in the number of catastrophic outliers and improved rms values, when photometric and spectroscopic redshifts are compared. Since redshifts are now determined from up to 15 bands, compared with generally a maximum of 7 previously, the new redshifts are more reliable. The new catalogues comprise 1,009,607 redshifts, out of a total of 1,066,879 in the original SPRC.

2 APERTURE CORRECTIONS

Aperture matching between wavelength bands is crucial to the success of photometric redshifts. For distant galaxies photometry in a 2 or 3 arcsec aperture will give the integrated light from the whole galaxy. For nearby galaxies photometry in the same aperture would be dominated by light from the central regions of the galaxy and might comprise only a few % of the integrated light. In template-fitting methods such as we are using here it is natural to try to seek an estimate of the integrated spectral energy distribution (SED), so that near and distant galaxies can be fitted with the same template. This also has the benefit that

2 http://surveys.roe.ac.uk/wsa/dr8plus-release.html 3 http://www.star.bris.ac.uk/∼mbt/topcat/ derived properties such as luminosity, star-formation rate, stellar mass and dust mass have a physical meaning for the galaxy.

There are several options for estimating the integrated light from an extended galaxy in any particular waveband. Optical and near infrared catalogues generally provide Kron and Petrosian integrated magnitudes. Sextractor (Bertin and Arnouts 1996) provides a mag-auto integrated magnitude (similar to Kron magnitude). These integrated magnitudes are derived essentially by a curve of growth fitted to photometry derived in a series of apertures of different sizes. However in practice using integrated magnitude estimates for each photometric band to derive the integrated SED gives poor results for photometric redshifts. This is presumably because of the uncertainty introduced by the process of estimating the integrated magnitude, primarily because of different contributions of sky photon noise. A much more successful option is to start from photometry derived in a single small aperture in each band, and then apply an aperture correction derived in a single chosen band to all the bands. This is the approach followed by Rowan-Robinson et al (2008) and Gonzalez-Solares et al (2011).

2.1 Optical data

The optical photometry in SPRC had been derived in most areas using Sextractor and we used magnitudes measured in a 2” diameter aperture, applying an rband aperture correction

delmagSP RC = r(mag-auto) - r, (1)

where r is measured in a 2” aperture (WFC ’aper2’),

to all bands. All optical magnitudes used in this work are AB magnitudes and all J,H,K magnitudes are Vega magnitudes (with the exception of the VVDS area, where they are AB magnitudes). The quoted optical and near infrared magnitudes have been PSF (point spread function) aperture corrected, to correct for the light lying outside the aperture for a point source. Hereafter in this paper we use the term ’aperture correction’ to mean the extended source aperture correction. Fig 1L shows the optical aperture correction, delmagSP RC , used in SPRC, versus redshift for the Lockman area, essentially a plot of (inverse) angular size versus redshift. The aperture correction was only applied to the optical magnitudes if it lies in the range -0.10 to -5.0. Otherwise it was set to zero. Sources with aperture correction > -0.10 mag are considered to be point sources within the uncertainties of the photometric accuracy and the estimation of the integrated magnitude. Sources with aperture correction < -5.0 mag. (< 0.01% of sources) are considered to be erroneous determinations of integrated magnitude.

Revised SWIRE photometric redshifts 3

Table 1. Explanation of magnitude fields

field am1-5 am21,22,23,25,26 am6-8

EN1 rev. WFC UgriZ SDSS ugriz 2MASS/UKIDSS JHK EN2 rev. WFC UgriZ SDSS ugriz 2MASS JHK Lock rev. SWIRE Ugri SDSS ugriz 2MASS/UKIDSS JHK VVDS VVDS ugri UBVRI VVDS JK SXDS Subaru Megacam ugriz - XMM SWIRE UgriZ Megacam ugriz UKIDSS JHK CDFS SWIRE gri - - S1 SWIRE B,V,R - -

For SDSS optical data, available for the Lockman, EN1 and EN2 areas, the ’model’ magnitude provides a well-calibrated integrated magnitude. Fig 1R shows delmagSP RC versus r(SDSS,model)- r(WFC,mag-auto). Quasars almost all have no aperture correction, as expected. For galaxies there is no sign of any correlation of r(SDSS,model)- r(WFC,mag-auto) with delmagSP RC , so the SDSS model magnitude is estimating approximately the same total magnitude as the WFC mag-auto. However there is quite a wide dispersion in r(SDSS,model)-r(WFC,mag-auto), sufficient to harm photometric redshift estimation (see SED plots below, Fig 14). This dispersion arises from the uncertainties in the two estimates of the integrated magnitude. We have therefore added r(WFC,mag-auto)- r(SDSS,model) to the SDSS model magnitudes to normalize the two sets of aperture corrections. The reason for making the WFC r-magnitude the preferred choice is that there are far more SWIRE sources with WFC data than with SDSS data. Also the WFC goes one magnitude deeper than SDSS and therefore provides more accurate magnitudes for fainter SDSS sources. For SDSS data we investigated using the point-source (PS) magnitudes, with aperture correction r(SDSS,Petr)-r(SDSS,PS), but this gave inferior results to using the SDSS model magnitudes. This is understandable because the model magnitudes use an aperture derived in the r-band and then measure the flux in that aperture in all the bands, ensuring consistent galaxy colours.

We investigated various other options for aperture corrections in the optical. The revised WFC photometry of Gonzalez-Solares et al (2011), available in the fusion catalogues, includes the Petrosian magnitude in each band, so we define

delmagW F C = r(WFC,Petr)-r. (2)

This is well correlated with delmagSP RC (Fig 2L), but with significant scatter.

Using delmagW F C instead of delmagSP RC led to slightly worse phot-z results, so we decided to stick with delmagSP RC , which was derived from the Sextractor r-band mag-auto, for WFC data (while using the revised WFC magnitudes supplied in the fusion catalogue). However where a mag-auto estimate is not available, we have used delmagW F C .

2.2 Near infrared data

For 2MASS data an option for the aperture correction is to use the K-iso magnitude if available, and the K- PS magnitude otherwise, with aperture correction

delmag2MASS =K(2MASS,iso)-K(2MASS,PS). (3) For UKIDSS data the natural aperture correction to consider is delmagUKIDSS =K(UKIDSS,Petr)-K(UKIDSS,aper3), (4)

applied to the aper3 (1.0”) J,K magnitudes. Both delmag2MASS and delmagUKIDSS are quite well correlated with delmagSP RC (Fig 2R shows the correlation of delmagUKIDSS with delmagSP RC ) and this suggests the idea of using k*delmagSP RC as the near infrared aperture correction, with k to be determined for each survey. The direct use of delmag2MASS and delmagUKIDSS for 2MASS and UKIDSS magnitudes, respectively, resulted in a worse phot-z solution, so the use of k*delmagSP RC was explored in some detail.

Fig 3 shows delmagSP RC versus (z-J), with no aperture correction applied to J. There is a very strong correlation. Fig 4L shows delmagSP RC versus (z-J) for 2MASS data, with an aperture correction 0.8*delmagSP RC applied to J. Fig 4R shows delmagSP RC versus (z-J) for UKIDSS data, with an aperture correction 1.1*delmagSP RC applied to J. Only sources with spectroscopic redshift <0.3 have been included to minimize the possibility of evolution of colour with angular size. We can see that these corrections work well in removing the correlation of colour with delmagSP RC .

2.3 IRAC data

In SPRC we used Kron fluxes if the 3.6 μm size was greater than a specified threshold (area > 200 pix-

4 Rowan-Robinson M. et al

Figure 1. LH: SPRC aperture correction versus z_{sp} for Lockman. RH: SPRC aperture correction versus r(SDSS,model)- r(WFC,mag-auto). Red symbols: galaxies, blue symbols: QSOs.

Figure 2. LH: Plot of delmag_{W F C} (eqn 2) versus delmag_{SP RC} , the SPRC aperture correction, in Lockman. The straight line has slope 1. RH: Plot of delmag3 (eqn 3) versus delmag_{SP RC} , the SPRC aperture correction. The straight line has slope 0.8.

els) , ’IRAC-aper2’ fluxes (measured in a 3.8” aperture) otherwise. For sources smaller than this threshold, the Kron and aper2 magnitudes agreed well. This is also the approach adopted here. Fig 5 shows delmagSP RC versus (K-am(3.6μm)) for 2MASS (L) and UKIDSS (R) data, where am(3.6μm) is the AB magnitude derived from the Spitzer 3.6μm flux. There are some residual issues for the UKIDSS-IRAC comparison. This does harm the photometric redshift estimates for some objects, resulting in a larger reduced χ^2 for the fit. SED fits for selected galaxies with χ^2 > 5 with known spectroscopic redshift shows that the IRAC fluxes gives good consistency with the aperture corrected optical magnitudes. The problem lies with overestimation of the J,H, and especially K brightness for extended galaxies. Changing the IRAC aperture correction to k*delmagSP RC improved the appearance of Fig 6R enormously, but led to worse phot-z results. The main problem was an offset of the log10(1+z_{ph}) points relative to log10(1+zsp) by ∼0.01. This was not fixed by the process of in-band correction factors (Ilbert et al 2006), and it would probably be necessary to revise the templates in the near infrared to achieve convergence.

Revised SWIRE photometric redshifts 5

Figure 4. LH: SPRC aperture correction versus corrected (k=0.8) z-J for 2MASS. RH: SPRC aperture correction versus corrected (k=1.1) z-J for UKIDSS. Only sources with spectroscopic redshift <0.3 have been included to minimize the possibility of evolution of colour with angular size.

Figure 5. LH: SPRC aperture correction versus corrected (k=0.7) K-am(3.6) for 2MASS. RH: SPRC aperture correction versus corrected (k=1.1) K-am(3.6) for UKIDSS. Only sources with spectroscopic redshift <0.3 have been included to minimize the possibility of evolution of colour with angular size.

3 PHOTOMETRIC REDSHIFTS

The photometric redshift method is as described in SPRC. It is a two-pass template method based on 6 galaxy ( 11 in the second pass) and 3 AGN templates. The galaxy templates were first generated empirically, then modelled with a full star-formation history so that star-formation rates and stellar masses can be derived. After the first pass the infrared excess relative to the starlight fit is modelled with four infrared SED types (cirrus, M82 starburst, Arp220 starburst and AGN dust torus). Dust extinction with AV ranging up to 1.0 is permitted. For QSOs SMC dust properties are assumed.

For galaxies and QSOs, JHK magnitudes, and 3.6 and 4.5 μm fluxes were used in the first pass through the data provided there was no evidence of a strong AGN dust torus component, determined by condition S(5.8) > 1.2 S(3.6). For galaxies these near infrared data were not used in the second pass fit if the dust torus component was dominant at 8 μm from the ir template fitting. For the second pass for QSOs, a new approach was developed, described in section 4 below,

6 Rowan-Robinson M. et al

Figure 3. SPRC aperture correction versus z-J, with no aperture correction applied to J.

to allow use of the near infrared data even though a dust torus component is present.

In the photometric redshift solution we used the new SDSS ’model’ magnitudes, and the revised WFC magnitudes, but we retained the WFC star/galaxy classification in each band (because this information is available for a much higher proportion of sources) and the optical aperture correction used in SPRC. We used 2MASS JHK (PSC), where available, and UKIDSS JK (aper3) if not.

We used galaxies with known spectroscopic redshifts to determine in-band correction factors, following Ilbert et al (2006). These are shown in Table 2. Spectroscopic redshifts came from a wide range of references (details are given in the on-line catalogue) and are mostly in the range 0-1.2 for galaxies.

Fig 6 shows a comparison of the SDSS log10(1 + z_{phot}) with log10(1 + zspect) for the SWIRE Lockman sample (LH). and the same plot for the present sample (RH). The SDSS performance is better at z < 0.3, but our approach works better at z > 0.5. To improve our photometric redshifts at z < 0.3 it would be necessary to refine our optical templates using the new photometric data, and to increase the number of templates. The latter would be likely to worsen the performance at higher redshift through increased aliasing.

Fig 7L shows the same comparison for the SWIRE Photometric Redshift Catalogue, restricted to r < 23.5, reduced χ^2 < 3 and at least 5 photometric bands in the solution. Fig 7R shows a similar plot for the revised SPRC, with the requirement that K be selected, and for a minimum of 7 photometric bands. We can see that inclusion of near infrared (JHK) data in the solution has reduced the number of catastrophic outliers.

Fig 8L shows the same comparison for the revised catalogue in XMM, with at least 9 bands in the solution in the solution. Fig 8R shows the same comparison for photometric redshifts from the LePhare method (Ilbert et al 2006). The latter results are better for z < 0.5, but worse for z > 0.5. Again this is probably the consequence of the larger number of templates used by Ilbert et al.

4 QSOS

The SPRC approach required that an object be flagged as stellar to consider a QSO optical template. With the SPRC stellar flag some QSOs get missed (and end up with the wrong redshift) as a result of this condition. As discussed in SPRC it is not possible to allow a QSO template option for all galaxies, since far too many galaxies end up with mistakenly high redshifts. However, while still requiring a stellar flag for an object to select a QSO template, we have allowed the SDSS stellar flag to override the WFC flag where they disagree and this allows a few more quasars through.

Salvato et al (2009) have demonstrated excellent performance for 1032 QSOs and AGN in the COS- MOS field, using 30 photometric bands, including 12 narrow-band filters. They introduce two innovations: firstly they track the variabilty of quasars and apply an appropriate correction to the photometry. Secondly they use templates that include a range of contributions from AGN dust tori.

While we do not have the information to track QSO variability in our photometry, we have explored the idea of adding a range of AGN dust tori strengths to our QSO templates during the second pass, and then using the 1.25-8 μ m data in the redshift solution. The amplitude of dust tori added corresponded to Ltor/Lopt = 0, 0.2, 0.4, 0.6, 0.8, 1.0. The performance for QSOs is much improved (Fig 9), especially in the reduction of catastrophic outliers. For at least 11 photometric bands, reduced χ^2 < 3, r < 21.5, we find an rms of 9.3% and an outlier rate 9.3%. For comparison, Salvato et al (2009), with 30 bands, achieved an rms of 1.2% for QSOs with I < 22.5, and an outlier rate of 6.3%. Their greatly improved rms can be attributed to the correction for variability and to the use of 30 photometric bands, including 12 narrow band filters. But our outlier performance is almost as good, despite less than half the number of photometric bands.

5 REASONS FOR POOR χ^2

Although the photometric redshift estimates are good for sources where the reduced χ^2 < 3, the estimates get slightly worse as χ^2 increases and some sources have very large χ^2. We have investigated the reasons for poor χ^2 through colour-colour diagrams and SED plots. The main reasons found for poor χ^2 are found

Revised SWIRE photometric redshifts 7

Table 2. Correction factors for fluxes in each band, by area

area U’ g’ r’ i’ Z’ J H K 3.6 μm 4.5 μm

EN1,EN2 1.354 1.135 1.104 1.059 0.650 0.976 0.900 0.888 1.071 1.104 Lockman 1.360 1.062 0.982 0.922 0.923 0.904 0.899 1.036 1.066 VVDS 1.046 0.969 0.928 0.960 0.972 1.173 1.029 1.085 1.015 XMM-LSS 1.308 1.206 1.056 0.925 1.011 1.085 1.086 CDFS 1.046 0.969 0.916 0.991 0.972 1.238 1.037

Figure 6. LH: SDSS photometric redshifts versus spectroscopic redshifts for Lockman SWIRE sample. RH: photometric redshifts from present work versus spectroscopic redshifts for Lockman SWIRE sample.

Figure 7. LH: Photometric redshifts from SWIRE Photometric Redshift Catalogue (Rowan-Robinson et al 2008). for galaxies with r < 23.5, at least 6 photometric bands, reduced χ^2 < 3. Red symbols: galaxies. RH: Same for revised SPRC, with at least 11 photometric bands.

8 Rowan-Robinson M. et al

Figure 8. L: Photometric redshifts in XMM-LSS using new fusion catalogue: ugriz from SDSS, revised ugri from WFC, JHK from 2MASS, JK from UKIDSS. R: Photometric redshifts from LePhare method (Ilbert et al 2009).

Figure 9. LH: Photometric redshifts from SWIRE Photometric Redshift Catalogue (Rowan-Robinson et al 2008). for quasars with r < 23.5, at least 7 photometric bands, reduced χ^2 < 3. Blue symbols: QSOs. RH: Same for revised SPRC, with at least 12 photometric bands.

to be (i) contamination by stars, (ii) poor photometry, (iii) QSOs misclassified as galaxies, (iv) QSOs for which the extinction is higher than the maximum assumed AV = 1.

Stars can be recognised in a plot of the ratio of 3.6 μm to r-band flux versus r-i ( Fig 10L, see Rowan- Robinson et al 2005). A clear stellar sequence can be seen. We have removed stars from the catalogue by excluding 17326 sources with stellar flags which lie below the solid line in Fug 10L, and which had reduced χ^2 > 7. Figure 10R shows the χ^2 and photometric redshift generated for these candidate stars by the photometric code. Stars can generate spectacularly bad χ^2 and tend to alias with specific galaxy and QSO redshifts. We believe that few of the sources with χ^2 < 7 are stars.

Figure 11L shows (u-g) versus (g-r) (WFC photometry) for QSOs, with blue symbols for sources with χ^2 < 3 and red symbols for χ^2 > 7, after removal of stars using the 3.6μm-(r-i) constraint. The broken locus is for blackbodies with temperature ranging from 3000 to 15000, the solid locus shows the effect of extinction using SMC dust properties. The χ^2 > 7 objects show a much wider range of colours than those with χ^2 < 3. Examination of SED plots shows that most of the χ^2 > 7 objects are stars with slightly

Revised SWIRE photometric redshifts 9

Figure 10. LH: Ratio of 3.6 μm to r-band flux versus r-i for whole catalogue, for sources with χ^2 > 20 and at least 12 photometric bands. A clear stellar sequence is seen. Stars have been excluded from the catalogue by removing objects flagged as point sources lying below the solid line. RH: Reduced χ^2 versus estimated photometric redshift for sources classified as stars. Red symbols: sources which the photometric redshift code identified as galaxies; blue symbols: QSOs.

Figure 11. LH: (u-g) versus (g-r) (WFC photometry) for QSOs in EN1 field with at least 11 photometric bands, with blue symbols for sources with χ^2 < 3 and red symbols for χ^2 > 7, after removal of stars using the 3.6μm-(r-i) constraint. The broken locus is for blackbodies with temperature ranging from 3000 to 15000, the solid locus shows the effect of extinction (A_V =0-5) assuming SMC dust properties. RH: Reduced χ^2 versus estimated photometric redshift for sources classified as stars. Red symbols: sources which the photometric redshift code identified as galaxies; blue symbols: QSOs.

higher 3.6 μm fluxes than the stellar sequence in Fig 10L. A few are QSOs with higher extinction than the maximum AV = 1 we have used. Others have high χ^2 simply because of poor photometry or SED shapes differing from our templates.

Figure 11R shows (u-g) versus (g-r), for galaxies with SDSS photometry, with different symbols for χ^2 < 3 and > 7. About 10% of ’galaxies’ with χ^2 > 7 achieved much improved fits with QSO templates (some of these did not have the stellar flag that was a prerequisite for consideration as a QSO). Some are stars with slightly higher 3.6 μm fluxes than the stellar sequence in Fig 10L. For the rest the problem appears to be poor photometry (and underestimated photometric errors).

Figure 12L shows (i-z) versus (r-i) (WFC photometry) for galaxies in EN1 with at least 11 photometric bands, with different symbols for χ^2 < 3 and

10 Rowan-Robinson M. et al

Figure 12. L: (i-z) versus (r-i), WFC photometry, for galaxies with at least 11 photometric bands and χ^2 > 7 (red), < 3 (blue). R: Histogram of reduced χ^2 for EN1 area, after exclusion of stars.

> 7. The galaxies with higher χ^2 show a wider spread in colours, suggesting the main issue is photometric problems. Figure 12R shows a histogram of the reduced χ^2 for sources in the EN1 area, after removal of stars.

6 REVISED SWIRE PHOTOMETRIC REDSHIFT CATALOGUE

Our revised SPRC contains 818555 objects, 204421 in EN1, 116195 in EN2, 217461 in Lockman, and 280478 in XMM-LSS, compared with 875353 in the same areas in the original SPRC. 3.6% of SPRC sources did not find a match in the fusion catalogues, mainly because the latter omitted 24 μm only sources. A further 1% failed to achieve a redshift solution, either because there were less than two valid photometric bands or because the reduced χ^2 > 100. The SWIRE redshifts in CDFS and S1 have not been revised because we have no new photometric information in these areas. These two areas bring the total number of redshifts in the revised catalogue^4 to 1009607, with readmeSWIRErev in same directory). Our new catalogue delivers photometric redshifts for 26288 quasars.

Fig 13L shows a histogram of the number of photometric bands for the new catalogue, compared with that for the SPRC. Fig 13R shows the redshift distribution of galaxies and quasars in the new catalogue. Although most of the galaxy redshifts are at z < 1.5, there is a broad tail to higher redshift. Our catalogue is a very significant resource for galaxies at 4 http://astro.ic.ac.uk/∼mrr/swirephotzcat/zcatrev12ff3.dat.gz high redshift, with 106537 sources with z > 2 and 15226 sources with z > 4.

7 SEDS OF OUTLIERS

To investigate outliers, we have plotted in Fig 14 the SEDs of 8 outliers from the z_{phot} v. zspec comparisons, those with χ^2 < 3, and with more than 12 photometric bands in EN1, EN2 and Lockman, and with more than 9 bands in XMM-LSS. SDSS photometry (after applying the aperture correction of section 2.1) is shown in red. Details of the sources are given in Table 3. Two objects have aliases at the spectroscopic redshift, one appears to need an Sab template with AV =0.35 (AV is set to zero for the Sab template in our code), and 4 could be errors in the spectroscopic redshift (two were based on a single line).

8 DISCUSSION

With the changes discussed in the previous sections, we now see improvements in the fraction of catastrophic outliers in the photometric redshift estimates. The rms errors for galaxies are very similar to those achieved in SPRC, whole those for quasars are significantly improved.

For galaxies with reduced χ^2 < 3, r < 23.5, the rms in (z_{phot} − zspec)/(1 + zspec), after rejection of outliers with values discrepant by 15% or more, is 3,7, 3.4 %, for no. of bands 10, 14 respectively. The corresponding percentages of outliers are 1.2 and 0.2 %, respectively. Fig 15L shows how the percentage of outliers for galaxies with |log10(1 + z_{phot})/(1 + zspect)| > 0.06, vary with the number of photometric bands. Fig 15R shows the percentage rms (σz /(1 + z)) versus

Revised SWIRE photometric redshifts 11

Figure 13. L: Histogram of number of bands used in estimating photometric redshifts in revised catalogue (solid line) compared with SPRC (broken line). R: Histogram of redshifts in revised SWIRE Photometric Redshift Catalogue (red: galaxies, blue: QSOs, x 10).

Table 3. z_{ph} v. z_{sp} outliers whose SEDs are plotted in Fig 10, from bottom

RA dec z_{spec} ref. z_{phot} no. of bands notes

161.30797 58.74822 0.2470 1 0.52 12 alias 161.72533 58.99032 0.1890 1 0.55 12 alias 161.74496 58.94529 0.8220 1 0.25 12 zspec error ? 161.94997 59.29018 0.5600 2 0.17 13 zspec error ? 36.40352 -4.39069 0.1307 3 0.85 9 zspec error (single line) ? 36.47719 -4.36419 0.8277 3 1.24 9 zspec error (single line) ? 248.47900 41.48283 0.1592 4 0.47 14 need Sab with Av=0.35

1 Owen et al 2009 2 Rowan-Robinson et al 2008 3 Le Fevre et al 2005 4 Rowan-Robinson et al 2004

number of photometric bands. The additional photometric bands provided by the JHK data from 2MASS and UKIDSS now have a clear beneficial effect, especially on the fraction of catastrophic outliers. Our results can be compared directly with the corresponding results for SPRC, and with new results from EAZY (Brammer et al 2008), GOODS-S (Dahlen et al 2010), and COSMOS30 (Ilbert et al 2009). While these comparisons can be affected by differences in the survey depths, the main differences between these surveys is the number of photometric bands. Our outlier performance is consistently better than other methods.

Our new SWIRE redshift catalogue should be useful for improved studies of the infrared extragalactic population and for the Herschel surveys carried out in all of the SWIRE fields by the Hermes consortium.

REFERENCES

Berta S., Lonsdale C.J., Siana B., Farrah D., Smith H.E., Polletta M., Franceschini A., Fritz J., Perez-Fournon I., Rowan-Robinson M., Shupe D., Surace J., 2007, AA 467, 565 Bertin E., Arnouts S., 1996, AA 117, 393 Brammer G.M. et al, 2008, ApJ 686, 503 Dahlen T. et al, 2010, ApJ 724, 425 Furusawa H. et al, 2008, ApJS 176, 1 Gonzalez-Solares E. et al, 2011, MNRAS 416, 927 Hildebrandt H. et al 2010, AA 523, 31 Ilbert O. et al, 2006, AA 457, 8411 Ilbert O. et al, 2009, ApJ 609, 1236 Le Fevre O. et al, 2005, AAS 207, 6334 McCracken H.J. et al, 2003, AA 410 17 Oliver, S.J., et al, 2012, MNRAS 424, 1614 Owen F.N., Morrison G.E., 2009, ApJS 182, 625 Pierre M. et al, 2007, MNRAS 382, 279 Rowan-Robinson M. et al, 2004, MNRAS 351, 1290 Rowan-Robinson M. et al, 2008, MNRAS 386, 687 Salvato M. et al, 2009, ApJ 690, 1250

12 Rowan-Robinson M. et al

Figure 14. SEDs of outliers in z_{ph} v. z_{sp} plot, using the spectroscopic redshift, with details of sources given in Table 1. Outliers with more than 12 photometric bands in EN1, EN2, Lockman, and more than 9 bands in XMM-LSS, are included.

Surace J. et al, 2004, The SWIRE N1 Image Atlases and

Source Catalogs (Pasadena: Spitzer Science Center) Wolf C., et al , 2004, AA 421, 913 Wolf C., Hildebrandt H., Taylor E.N., Meisenheimer K.,

2008, AA 492, 933

Revised SWIRE photometric redshifts 13

Figure 15. L: Percentage of outliers versus number of photometric bands for SPRC (black loci) and for fusion catalogue (red loci), for sources with reduced χ^2 < 3, r < 23.5. R: Percentage rms (σ_z /(1 + z)) for SPRC (black loci) and for fusion catalogue (red loci), for sources with reduced χ^2 < 3, r < 23.5.