arXiv:1301.0404v1 [astro-ph.SR] 3 Jan 2013

Astronomy & Astrophysics manuscript no. tx-psc © ESO 2017 December 26, 2017

Catching the fish – Constraining stellar parameters for TX Psc using spectro-interferometric observations^⋆

D. Klotz^1, C. Paladini^1, J. Hron^1, B. Aringer^1, S. Sacuto^{1,2}, P. Marigo^3, and T. Verhoelst^{4,5}

1 Department of Astrophysics, University of Vienna, Türkenschanzstrasse 17, A-1180 Vienna

e-mail: daniela.klotz@univie.ac.at 2 Department of Physics and Astronomy, Division of Astronomy and Space Physics, Uppsala University, Box 516, 75120, Sweden 3 Department of Physics and Astronomy G. Galilei, University of Padova, Vicolo dell’Osservatorio 3, I-35122 Padova, Italy 4 Belgian Institute for Space Aeronomy (BIRA-IASB), Ringlaan-3-Avenue Circulaire, B-1180 Brussels, Belgium 5 Instituut voor Sterrenkunde, KULeuven, Celestijnenlaan 200D, 3001 Heverlee, Belgium

Received ; accepted

ABSTRACT

Context. Stellar parameter determination is a challenging task when dealing with galactic giant stars. The combination of different investigation techniques has proven to be a promising approach. We analyse archive spectra obtained with the Short- Wavelength-Spectrometer (SWS) onboard of ISO, and new interferometric observations from the Very Large Telescope MID-infrared Interferometric instrument (VLTI/MIDI) of a very well studied carbon-rich giant: TX Psc.

Aims. The aim of this work is to determine stellar parameters using spectroscopy and interferometry. The observations are used to constrain the model atmosphere, and eventually the stellar evolutionary model in the region where the tracks map the beginning of the carbon star sequence.

Methods. Two different approaches are used to determine stellar parameters: (i) the ‘classic’ interferometric approach where the effective temperature is fixed by using the angular diameter in the N-band (from interferometry) and the apparent bolometric magnitude; (ii) parameters are obtained by fitting a grid of state-of-the-art hydrostatic models to spectroscopic and interferometric observations. Results. We find a good agreement between the parameters of the two methods. The effective temperature and luminosity clearly place TX Psc in the carbon-rich AGB star domain in the H-R-diagram. Current evolutionary tracks suggest that TX Psc became a C-star just recently, which means that the star is still in a ‘quiet’ phase compared to the subsequent strong-wind regime. This is in agreement with the C/O ratio being only slightly larger than 1.

Key words. Stars: AGB and post-AGB - Stars: atmospheres - Stars: carbon - Stars: fundamental parameters - Techniques: interferometric - Techniques: spectroscopic

1. Introduction

The asymptotic giant branch (AGB) is the late evolutionary stage of low- to intermediate- mass stars (1 − 8 M⊙). On the early- AGB the carbon-to-oxygen-ratio is smaller than one. After several thermal pulses, the atmospheres of objects with masses between 1 − 4 M⊙ will very likely turn from oxygen-rich into carbon-rich because of the third dredge-up (Iben & Renzini 1983). Good estimates of stellar parameters are needed for a profound understanding of the evolution of this stage. Their determination is a challenging task because of the complexity of the atmospheres of these objects. It is demonstrated that the combined use of spectroscopic and interferometric observing techniques can efficiently help to ascertain stellar parameters (e.g. Wittkowski et al. 2001, 2008, 2011; Neilson & Lester 2008; Paladini et al. 2011; Sacuto et al. 2011a; Martí-Vidal et al. 2011). At the same time these observations provide constraints for existing model atmospheres: e.g. COMARCS (Aringer et al. 2009), Höfner et al. (2003), PHOENIX (Hauschildt et al. 1999), ATLAS (e.g. Kurucz 1993), CODEX (Ireland et al. 2008, 2011). TX Psc is one of the brightest and closest carbon-rich AGB stars. It is listed as an irregular variable in the General

⋆ Based on observations made with ESO telescopes at Paranal Observatory under program IDs 74.D-0601, 60.A-9224, 77.C-0440, 60.A-9006, 78.D-0112, 84.D-0805

Catalogue of Variable stars (Samus et al. 2009) with a mean brightness of ∼5 mag and a peak-to-peak amplitude of 0.4 mag in the V-band (Jorissen et al. 2011). Distance estimates range from 275 to 315 pc (van Leeuwen 2007; Claussen et al. 1987; Bergeat & Chevallier 2005). Different ISO/SWS spectra of TX Psc (Jørgensen et al. 2000; Gautschy-Loidl et al. 2004) show that there is a difference in the 3 μm feature between 1996 and 1997. With the help of plane-parallel, hydrostatic models Jørgensen et al. (2000) interpret this difference as a change in temperature of ∼100 K. The photometry and spectra were successfully modeled by Gautschy-Loidl et al. (2004) with dustfree dynamical models that reproduce the region between 1 − 5 μm. They claim that the region between 8 − 9 μm is affected almost solely by CS. The authors suggest that observations from 8 − 9 μm show the deep photosphere, while the expected absorption of HCN and C_2H_2 originating from the higher layers is not observed. As this object is almost (carbon) dust-free we may infer it became a carbon star quite recently. Therefore, this star is a perfect candidate to constrain the region where the transition from oxygen- to carbon-rich occurs.

In this work we present a study of the atmosphere and a stellar parameter determination for TX Psc. We combine spectrointerferometric observations of VLTI/MIDI and spectroscopic observations from ISO/SWS and compare them to geometric, hydrostatic, and evolutionary models.

Klotz et al.: Constraining stellar parameters for TX Psc

Fig. 1. N-band spectrally dispersed uv-coverage of the MIDI observations of TX Psc. Colour levels range from 8-11.5 μm (black to blue, respectively) with a step size of 0.5 μm. North is up and East is left.

A description of observations and data reduction is given in Sect. 2. Models and approaches to derive synthetic observables are presented in Sect. 3. The stellar parameters are derived in Sect. 4 and compared to state-of-the-art evolutionary tracks in Sect. 5. A summary of the results is given in Sect. 6.

2. Observations and Data Reduction

Sections 2.1 and 2.2 discuss the interferometric and spectroscopic observations obtained with VLTI/MIDI and ISO/SWS, respectively. Section 2.3 discusses possible cycle-to-cycle and intra-cycle variability of the data.

2.1. MIDI visibilities and spectra

TX Psc was observed in 2004 with the 8.2 m Unit Telescopes and in 2005, 2006 and 2011 with the 1.8 m Auxiliary Telescopes of the Very Large Telescope Interferometer MIDI (Leinert et al. 2003). MIDI covers the N-band and provides spectrally dispersed visibilities, differential phases and fluxes (resolution R = 230 for observations in 2004, R = 30 for observations in 2005, 2006 and 2011).

The journal of available MIDI observations is given in Table 1 (electronic version only). The uv-coverage is plotted in Fig. 1. Data are reduced using MIA+EWS 1.7.1^1 (Jaffe 2004; Ratzka 2005; Leinert et al. 2004). Observations are not used if one or more of the selection criteria discussed in Klotz et al. (2012a) are violated (observations that are not boldfaced in Table 1). Uniform-disk angular diameters and IRAS 12 μm flux of the calibrator targets are given in Table 2 (electronic version only). As only one suitable calibrator is available per observation, a standard multiplicative error of 10% is assumed for the calibrated visibilities (Chesneau 2007) . Some calibrated visibilities at baselines shorter than ∼30 m are significantly noisier and sometimes larger than unity after 11.5 μm. Therefore, in the following, spectro-interferometric observations are considered only for wavelengths shorter than 11.5 μm.

For the calibrated spectra additional selection criteria are applied (Chesneau 2007): (i) the airmass difference between science and

1 http://www.strw.leidenuniv.nl/∼jaffe/ews/MIA+EWS- Manual/index.html calibrator observations is < 0.2, (ii) the spectral type of the calibrator is not later than M0. Considering these criteria, five spectra are derived (flagged with ‘a’ in Table 1).

TX Psc is almost unresolved for baselines shorter than 32 m. Therefore, we expect that the star is unresolved by the singledish UTs. Thus, most of the mid-infrared (mid-IR) flux is located within the field-of-view (FoV) of the UTs and consequently also in the FoV of the ATs and ISO, which makes the spectra fully comparable to each other.

2.2. ISO spectra

Three spectra of TX Psc were observed with the Short- Wavelength-Spectrometer (SWS, de Graauw et al. 1996) onboard of ISO (Sloan et al. 2003; Jørgensen et al. 2000). Two spectra have a resolution of R ∼ 200 and range from 2.36 − 45.35 μm. The other spectrum ranges from 2.45 − 45.20 μm and has a resolution of R ∼ 2 000 which has been binned to the resolution of the other spectra. For the ISO spectra a multiplicative error of ±10% is assumed from 2.38-4.05 μm and ±5% afterwards (Sloan et al. 2003).

2.3. Interferometric and spectroscopic variability

In the left panel of Fig. 2 the calibrated MIDI spectra are overplotted to the ISO/SWS spectra. The flux level of the MIDI observations is the same (within the error bars) as the ISO/SWS spectra taken at 1996 Nov 26 and 1997 Dec 11. This suggests that no significant cycle-to-cycle variation is expected in the mid-IR. The right plot of Fig. 2 shows part of the lightcurve of TX Psc in V taken from AAVSO. The spectra from 1996 Nov 26/1997 Dec 11 were observed at a ’local’ visual maximum/minimum, respectively. In the following we will use these two spectra to derive the parameters of the star at different phases. As we do not have any information on the V magnitude of the spectrum from 1997 May 24, this spectrum is not used in the subsequent sections. Additionally, the phase for all the MIDI observations is unknown. However, AAVSO visual estimates from one specific observer revealed that none of the MIDI observations were taken at visual minima or maxima. Simulations with dust-free model atmospheres show that the effect of pulsation on the N-band UD-radius is smaller than 0.1 mas at 1 kpc (Paladini et al. 2009). For a star at the distance of TX Psc this would be ∼0.3 mas. This value is beyond the limit of resolution of MIDI. Therefore, we do not expect any observed intra-cycle variability effect that is larger than the errors. This allows to combine all calibrated visibilities for the further analysis.

3. Model description

In the following we present the different classes of models and the derivation of synthetic observables that will be compared to observations in Sect. 4.

3.1. Hydrostatic models

Observed spectra and visibilities are compared to the grid of spherical hydrostatic model atmospheres and spectra of Aringer et al. (2009). These models are computed with COMARCS and are generated assuming hydrostatic local thermal and chemical equilibrium. The molecular and atomic opacities are treated in the opacity sampling (OS) approximation. The parameters that characterize a model are: effective temperature

Klotz et al.: Constraining stellar parameters for TX Psc

Fig. 2. Left: MIDI flux (error bars) for different dates. Overplotted are the three ISO/SWS spectra (full lines) of TX Psc. Right: AAVSO V-band light curve of TX Psc. Vertical lines mark the observation date of the ISO spectra. Colors are the same as in the left figure.

T_{eff}, metallicity Z, surface gravity g, mass M, and carbon to oxygen ratio C/O.

For this work we limit the sample to models having solar metallicity as the effect of metallicity is expected to be small for lowresolution spectroscopy. Additionally, there is no indication for largely non-solar metallicity from other properties of this star. The spectra cover the following parameters: 2 400 ≤ T_{eff} ≤ 4 000 K with steps of 100 K; Z/Z⊙ = 1; −1.0 ≤log(g[cm s^{−2}]) ≤ +0.0; M/M_⊙ = 1, 2; C/O= 1.05, 1.10, 1.40, 2.00. In order to get precise estimates of T_{eff}, additional model atmospheres were produced resulting in a grid spacing of ΔT=10 K. All the main molecular opacities typical for C-stars were included: CO (Goorvitch & Chackerian 1994), C_2 (Querci et al. 1974), HCN (Harris et al. 2006), CN (Jørgensen 1997) in the form of line lists, while C_2H_2 and C_3 (Jorgensen et al. 1989) as OS data. CS is not included due to the lack of line lists and OS data. Synthetic spectra with a resolution of 18 000 are computed in the wavelength range 0.8 − 25 μm. The spectra are convolved in order to get the same resolution as the observed data.

Among the output of the spherical radiative transfer code COMA is the monochromatic spatial intensity profile. This profile is used to calculate a synthetic visibility profile in the mid-IR for a subset of the models in the grid. A detailed description of the computation of the visibility profiles is given in Paladini et al. (2009).

3.2. Evolutionary tracks

The luminosity and effective temperature that are determined from hydrostatic models are compared to thermally-pulsing (TP) AGB evolutionary tracks from Marigo et al. (in prep). We selected TP-AGB sequences with an initial scaled-solar chemical composition (Z = 0.014, Y = 0.273), where Z and Y denote the mass fractions of metals and helium, respectively. TP-AGB evolutionary calculations are carried out from the first thermal pulse - extracted from the PARSEC database of stellar models (Bressan et al. 2012) - to the complete ejection of the envelope due to stellar winds. The TP-AGB tracks are based on numerical integrations of complete envelope models in which, for the first time, molecular chemistry and gas opacities are computed onthe-fly with the ÆSOPUS code (Marigo & Aringer 2009). This guarantees a full consistency of the envelope structure with the surface chemical abundances that may significantly vary due to the third dredge-up episodes and hot-bottom burning. The transition from C/O < 1 to C/O > 1 is followed accurately, in particular in the narrow range from 0.95 ≈ C/O ≈ 1.05, where an abrupt change in the molecular chemistry and opacity is expected to occur (see figures 11 and 16 in Marigo & Aringer 2009). This point is particularly relevant in the context of the present work, as TX Psc is found to have a surface C/O slightly above unity.

4. Stellar parameter determination

Stellar parameters for TX Psc were determined by a number of authors. A summary is given in Table 3.

In the following two different approaches will be used to determine the stellar parameters of TX Psc: (i) in Sect. 4.1 we use the ‘classical approach’ of interferometrists where spectrointerferometric observations are used to determine the effective temperature T_{eff} ; (ii) in Sect. 4.2 we follow the approach of Paladini et al. (2011, P11 hereafter) where spectroscopic/interferometric measurements are compared to hydrostatic models to determine T_{eff} and C/O ratio and to constrain mass and log g.

4.1. Approach 1: Geometric models

Interferometry is a powerful tool for constraining the morphology and size of stars and their environments.

A deviation from spherical symmetry for the circumstellar environment of TX Psc was detected by several authors at different spatial scales and wavelengths (e.g. Cruzalèbes et al. 1998; Ragland et al. 2006; Sacuto et al. 2011b; Jorissen et al. 2011, Hron et al in prep.). Clearly, the circumstellar environment of TX Psc is very complex and most likely unrelated effects shape the morphology in different regions, resulting in a large variety of structures. To study the geometry of the innermost region of the star in the N-band, the geometrical model fitting tool GEM- FIND (Klotz et al. 2012b) was used to fit the MIDI interferometric observations of TX Psc. A spherical UD-model is able to reproduce the calibrated visibilities, i.e. TX Psc can be assumed to be spherically symmetric in the mid-IR at spatial scales probed by our MIDI observations. The reason why the asymmetrical structures detected by other works are not observed is that they

Klotz et al.: Constraining stellar parameters for TX Psc

Table 3. Published stellar parameters of TX Psc.

Reference T_{eff} log g Mass C/O θ λ_θ d [K] [M_⊙] [mas] [μm] [pc]

Lasker et al. (1973) 9.00 0.66 de Vegt (1974) 8.00 0.71 Dunham et al. (1975) 10.20 0.69 Lambert et al. (1986) 3 030 0.0 1.03 Claussen et al. (1987) 280 Quirrenbach et al. (1994) 2 805 11.20 0.7-0.8 Richichi et al. (1995) 8.38 0.55-3.60 Dyck et al. (1996) 2 921 11.20 2.2 Jørgensen et al. (2000) 3 000 -0.5 1.02 Ohnaka et al. (2000) 3 000 1.07 3 100 1.17 Bergeat et al. (2001) 3 115 Harris et al. (2003) 3 050 0.0 1.02 Gautschy-Loidl et al. (2004) 3 200 -0.3 1 1.10 Bergeat & Chevallier (2005) 3 125 315 Ragland et al. (2006) 9.89 1.65 van Leeuwen (2007) 275^{+34}_{−26}

Fig. 3. Left: Calibrated visibilities (symbols) versus baseline length for three different wavelengths. The lines represent the bestfitting UD-model at the given wavelength. Right: Spectrally dispersed angular diameter plus errors from the best-fitting UD-model (dark grey shaded area). The light grey shaded area marks the region that is omitted for the mean diameter estimation.

were either detected at distances outside the FoV of MIDI or at smaller spatial scales beyond the detection limit of MIDI. This is supported by the differential phase measurements of MIDI, which do not show any deviation from zero. The calibrated visibilities are plotted together with the best-fitting UD-model in the left panel of Fig. 3 for three different wavelenghts. The right panel of Fig. 3 shows the wavelength dispersed diameter calculated with the UD-model (dark grey shaded area). The star appears larger between 8 and 9 μm. According to Gautschy-Loidl et al. (2004) CS is affecting this wavelength range. Because of this molecular contamination, this region is omitted and a mean angular diameter of θ = 10.51 ± 0.70 mas is calculated by averaging the diameter from 9-11.5 μm.

4.1.1. Effective temperature

The temperature can be determined using the apparent bolometric magnitude m_{bol} and the angular Rosseland diameter θ_{ross}. The apparent bolometric magnitude m_{bol} = 2.26 mag was derived by

F. Kerschbaum by fitting a combination of blackbodies to near- IR and IRAS data^2.

Various definitions for the radius can be found in literature (c.f. reviews by Baschek et al. 1991; Scholz 2003), where the most commonly used radius in atmospheric modeling is the Rosseland radius. It is defined by the distance between the center of the star and the layer having Rosseland optical depth τ_{ross} =^2_3 . This radius, however, is not an observable quantity and observed radii have to be converted by using model considerations. In the following we will derive this conversion factor for hydrostatic C-stars by using a subset of the hydrostatic models in the grid of Aringer et al. (2009) to derive a mean UD-radius in the mid-IR (9 − 11.5 μm). This mean UD-radius is plotted versus the Rosseland radius of the corresponding hydrostatic model in Fig. 4. There is a clear correlation between the two radii, yielding

R_{Ross} = 0.95 R_{UD} . (1)

2 Method described in Kerschbaum & Hron (1996a) and references therein; near-IR data from the IRAS catalogue and Fouque et al. (1992).

Klotz et al.: Constraining stellar parameters for TX Psc

Fig. 4. Rosseland radius of the synthetic models versus the derived mid-IR UD-radius of the same models (crosses). The blue line is a linear fit to the data.

Table 4. Stellar parameters derived from observations (middle block) and calculated (right block) using approach 1.

d θ_{UD} θ_{Ross} T_{eff} R L [pc] [mas] [mas] [K] [R_⊙] [L_⊙]

275 10.51±0.70 9.99 3127^{+192}_{−173} 294 7 406

280 10.51±0.70 9.99 3127^{+192}_{−173} 299 7 678

315 10.51±0.70 9.99 3127^{+192}_{−173} 337 9 717

This implies that for a hydrostatic C-star the Rosseland radius can be approximated by the mid-IR UD-radius if the derived correction factor of 0.95 is applied.

Applying this correction factor yields an angular Rosseland diameter θ_{Ross} = 9.99 mas. Together with the bolometric magnitude the distance-independent effective temperature can be derived. Using the three different distance estimates d that are available for TX Psc (see Table 3) a linear radius and luminosity can be calculated. Table 4 lists the derived and calculated stellar parameters of approach 1. Errors on the temperature are determined by using the errors on θ_{UD} and by assuming an arbitrary error of ±0.1 for m_{bol} that accounts for the stellar variability and the fitting error. These values are in agreement with those given in literature (see Table 3).

4.2. Approach 2: Hydrostatic models

The short wavelength part of the ISO spectrum of TX Psc is dominated by the 3 μm feature which has contributions from HCN and C_2H_2. The 5 μm feature, on the other hand, is due to C_3 and the fundamental band of CO. The region from 7 to 8 μm is dominated by HCN and C_2H_2 and according to Gautschy-Loidl et al. (2004) the region from 8 to 9 μm is affected by CS opacity. The low variability in the V-band (ΔV ∼ 0.4 mag) justifies the use of hydrostatic models in the near- as well as mid-IR. Additionally, hydrostatic models are able to reproduce large parts of the overall ISO as well as MIDI spectra. This indicates that the circumstellar environment of TX Psc is optically thin and contains almost no dust.

In Sect. 4.2.1 and 4.2.2 low-resolution spectroscopic observations are compared with synthetic spectra of hydrostatic models to fix the fundamental stellar parameters C/O ratio and T_{eff} . The overall energy distribution as well as the bands of the molecules that are present from 2.3-6 μm put strong constraints on these parameters (Jørgensen et al. 2000; Loidl et al. 2001; P11). Low resolution spectroscopy does not allow to ascertain mass and log g (Fig. 6-10 in P11). To determine these parameters Sect. 4.2.3 follows the approach described in P11: spectrointerferometric observations are compared to models of fixed T_{eff} and C/O ratio but varying log g and mass.

4.2.1. C/O ratio

Jørgensen et al. (2000) found the ratio between the 3 μm feature (HCN and C_2H_2) and the 5.1 μm feature (CO and C_3) to be a sensitive measure of the C/O ratio. In order to be independent of distance each model spectrum is normalized to the ISO flux at 2.9 μm (local minimum of molecular absorption, Aringer et al. 2009). A χ^2 test is applied between 2.9 - 6.0 μm to compare the observed ISO spectra (1996 Nov 26 and 1997 Dec 11) to the models. For both ISO spectra we find that the best solution is obtained with a C/O ratio of 1.05. Considering all solutions lying within the 68% confidence level a C/O ratio of 1.1 can be defined as an upper limit. Due to the coarse grid spacing for C/O this value is not a strict upper limit and no lower limit can be assigned. Figs. 5 and 6 show the ISO/SWS spectrum plotted together with models of different temperatures and C/O ratios. The upper panels draw the region around the 3 μm and 5.1 μm feature to a larger scale. These plots demonstrate that a synthetic spectrum with a C/O ratio larger or equal 1.4 is not able to reproduce the observations, because it over-evaluates the depth of the 5.1 μm feature. This finding is consistent with the C/O ratios given in literature (see Table 3).

4.2.2. Effective temperature

We expect the 3 μm feature to be a good temperature indicator for hydrostatic stars (P11). Consequently, in order to find the best temperature for TX Psc, a χ^2 test is used to compare the observed ISO spectra and the model spectra between 2.9 - 3.6 μm. Only model spectra lying within the confidence level of C/O (1.05, 1.1; see Sect. 4.2.1) are used for this test.

The large grid of models allows to determine T_{eff} very precisely. All solutions lying within the 68% confidence level have a temperature of 3 080^{+70}_{−60} / 3 170^{+70}_{−80} K for the visual minimum/maximum, respectively. The upper left panel of Figs. 5 and 6 show that models with higher/lower temperatures do not reproduce the depth of the 3 μm feature.

The temperature derived with approach 1 in Sect. 4.1.1 is within the errors of the temperature that is derived here for the visual minimum and maximum.

We confirm the finding of Jørgensen et al. (2000) that the difference in the two ISO spectra can be explained by a temperature change. The lightcurve suggests that this difference is due to variability effects, but time-series spectroscopy is needed to confirm this finding.

4.2.3. Surface gravity and mass

Interferometric observations are compared to synthetic visibilities of hydrostatic models of varying log g and mass us-

Klotz et al.: Constraining stellar parameters for TX Psc

Fig. 5. ISO/SWS spectrum of TX Psc at visual minimum from 1997 Dec 11 (black line) plotted with hydrostatic models (colored lines) of different temperature and C/O ratio. The best fitting model is plotted in green. Model spectra are normalized to the flux of the corresponding ISO spectrum at 2.9 μm.

Fig. 6. Same as Fig. 5, but for at visual maximum from 1996 Nov 21.

ing a χ^2 test. All synthetic visibilities are computed for the best-fitting values of T_{eff} and C/O-ratio from Sects. 4.2.1 and 4.2.2. Synthetic visibilities are derived at 3 different distances: 275 pc, 280 pc, 315 pc (van Leeuwen 2007; Claussen et al. 1987; Bergeat & Chevallier 2005, respectively). In Fig. 7 the wavelength-dispersed calibrated visibilities are plotted together with the synthetic visibilities of the best-fitting models. The region between 8 - 9 μm is not considered in the fitting, as the hydrostatic models do not include the CS opacity data. The middle block of Table 5 gives the best-fitting stellar parameters for a given distance that were determined using approach 2. It is clear from the table and from Fig. 7 that, given the error bars on the visibilities, there is a degeneracy between log g and mass. As the distance defines the level of visibility, there is also a degeneracy between distance and log g. From current TP-AGB evolutionary calculations (e.g. Karakas et al. 2002; Marigo & Girardi 2007, Marigo et al. in prep.) we expect that a 1 M_⊙ TP-AGB star with solar metallicity does not make the transition to the C-rich domain. This suggests that the log g values in Table 5 found for M = 2 M_⊙ are the more reliable ones. But, considering the degeneracy and the limited mass sampling (M = 1, 2 M_⊙) in the grid, also models with higher masses would reproduce the observed visibilities. To support this statement, one additional model with 3 M_⊙ is calculated and overplotted in Fig. 7 as dashed line. The models are almost indistinguishable. The right part of Table 5 gives stellar parameters that are calculated from the derived log g, mass and effective temperature. The luminosities are significantly larger than the L = 5 200 L_⊙ used

Klotz et al.: Constraining stellar parameters for TX Psc

Fig. 7. Wavelength-dispersed calibrated visibilities plus errors (dark grey shaded area) plotted with the best-fitting synthetic visibilities of hydrostatic models (full lines). To show the degeneracy between mass and log g one model with 3 M_⊙ is overplotted (dotted line).

by Gautschy-Loidl et al. (2004), but comparable to L = 7 700 L_⊙ derived by Claussen et al. (1987). The luminosities and radii are also in perfect agreement with the ones determined with approach 1 (see Sect. 4.1).

4.2.4. Photometric constraints on the best model

The best fitting hydrostatic models of visual minimum/maximum (model with lowest χ^2_{logg,M} in Table 5) are overplotted to the ISO and MIDI spectra as well as to photometric measurements in Fig. 8. Photometric measurements from Johnson et al. (1966), Mendoza V. & Johnson (1965) and Catchpole et al. (1979) were observed with the Johnson filter system. Zero points to convert these measurements from magnitudes to Jansky are taken from Cox (2000). These zero points are also used to convert observations from Bergeat et al. (1976) and Bergeat & Lunel (1980) as the authors claim that their filter system is similar to the Johnson filter system. Zero points for 2MASS photometry (Cutri et al. 2003) are given in Cohen et al. (2003). Olofsson et al. (1993) and Kerschbaum et al. (1996b) used the ESO filter system. Zero points are taken from Le Bertre (1988) and Wamsteker (1981). Noguchi et al. (1981) used their own filter system and corresponding zero points are given in their paper.

5. Comparison with evolutionary tracks

We follow the approach described in P11 and compare the stellar parameters with new evolutionary tracks of thermally pulsing AGB stars (Marigo et al., in prep).

Figure 9 depicts evolutionary tracks in the region of AGB stars in the H-R diagram. Overplotted are the determined luminosity and temperature for TX Psc for the two approaches. Only the best-fitting luminosity (see Table 5) at d=280 pc is plotted for TX Psc. Errors for the luminosity are assumed to lie in the order of ∼40% (uncertainty on the given distance measurement). We note an encouraging agreement between the observed location of TX Psc in the H-R diagram and the predicted ranges of luminosity and effective temperature for a carbon-rich star

Fig. 8. Best fitting hydrostatic models for the visual minimum (black line) and maximum (grey line). Superimposed are the ISO spectra of visual minimum (green line) and visual maximum (blue line), MIDI spectra (violet lines) and photometric measurements of different works (orange symbols). Model spectra are normalized to the flux of the corresponding ISO spectrum at 2.9 μm.

with solar-metallicity and C/O within a narrow interval (i.e. 1<C/O≤1.1). As we see in Fig. 9, the TP-AGB evolutionary tracks in the C-rich regime extend to much lower effective temperatures than the derived values for TX Psc. This cooling is mainly driven by the increase of the C/O ratio after each dredgeup episode, as well as by the progressive strengthening of the mass-loss efficiency. The relatively warm effective temperature of TX Psc suggests that this star is observed close after the transition into the C-star domain, in an early ‘quiet’ stage in which the strong wind has not yet developed. This picture is nicely supported by the observational findings already discussed in the previous sections.

It is visible from the evolutionary tracks that an AGB star with

Klotz et al.: Constraining stellar parameters for TX Psc

Table 5. Stellar parameters derived from observations (middle block) and calculated (right block) using approach 2.

d T_{eff,min} T_{eff,max} C/O log g M χ^2_{logg,M} R L_{min} L_{max} [pc] [K] [K] [M_⊙] [R_⊙] [L_⊙] [L_⊙]

275 3080^{+70}_{−60} 3170^{+70}_{−80} 1.05 -0.5 1 0.50 295 7019 7876 -0.2 2 0.50 295 7019 7876

280 3080^{+70}_{−60} 3170^{+70}_{−80} 1.05 -0.5 1 0.48 295 7019 7876 -0.2 2 0.53 295 7019 7876

315 3080^{+70}_{−60} 3170^{+70}_{−80} 1.05 -0.6 1 0.49 331 8836 9915 -0.3 2 0.53 331 8836 9915

solar metallicity will turn into a carbon-rich AGB star only for masses around 2 M_⊙ and higher. Also, the position of TX Psc in Fig. 9 suggests that the mass lies between 2 and 3 M_⊙. This is not in agreement with the best fitting models having 1 M_⊙ (Sect. 4.2.3), but in good agreement with the models having 2 M_⊙.

6. Conclusion

In this work we determined stellar parameters for TX Psc by comparing observations to geometric models (Klotz et al. 2012b), state-of-the-art hydrostatic model atmospheres (Aringer et al. 2009) and evolutionary models (Marigo et al. in prep.). Two different approaches were used to fix the parameters:

A1. Spectro-interferometric observations were used to determine a wavelength-dispersed uniform disk diameter. A correction factor for hydrostatic C-stars was derived from hydrostatic models to convert the UD diameter to the Rosseland radius, which was then used to determine the effective temperature T_{eff}.

A2. Spectroscopic measurements were compared to synthetic spectra from hydrostatic models to determine T_{eff} and C/O ratio. The mass and log g were constrained by comparing spectro-interferometric observations with synthetic visibility profiles from hydrostatic models.

The main advantage of approach 1 is the distance-independent determination of T_{eff}. On the other hand, conversion of the UD-radius to the Rosseland radius and the use of the apparent bolometric magnitude introduces uncertainties. Approach 2 allows to constrain not only T_{eff}, but also C/O, log g and M. One of the disadvantages of this technique is the unknown error that is introduced by the model. Additionally, the uncertainty in distance, that is needed to constrain log g and M, and the degeneracy between these two parameters, limits the accuracy of the parameter determination. This suggests that high-resolution spectroscopy is needed to fully discriminate between mass and log g.

There is a very good agreement between the best-fitting hydrostatic model atmosphere and observations (interferometry, spectroscopy and photometry).

Our spectro-interferometric results are also an important tool to constrain and validate stellar AGB models, that are still subject to severe uncertainties. We found that present TP-AGB tracks with a detailed treatment of molecular opacities nicely reproduce the derived T_{eff} , L, C/O values for TX Psc.

Acknowledgements. The authors thank Angela Baier for fruitful discussions on ISO spectra and Walter Nowotny for helpful discussions on SEDs and photometric filter systems. This work is supported by the Austrian Science Fund FWF under project number AP23006. BA acknowledges support from Austrian Science Fund (FWF) Projects AP23006 & AP23586 and from contract ASI- INAF I/009/10/0. This research has made use of the SIMBAD database, operated at CDS, Strasbourg, France. We acknowledge the variable star observations from the AAVSO International Database that were used in this research.

References

Aringer, B., Girardi, L., Nowotny, W., Marigo, P., & Lederer, M. T. 2009, A&A, 503, 913 Baschek, B., Scholz, M., & Wehrse, R. 1991, A&A, 246, 374 Bergeat, J. & Chevallier, L. 2005, A&A, 429, 235 Bergeat, J., Knapik, A., & Rutily, B. 2001, A&A, 369, 178 Bergeat, J. & Lunel, M. 1980, A&A, 87, 139 Bergeat, J., Sibille, F., Lunel, M., & Lefevre, J. 1976, A&A, 52, 227 Bressan, A., Marigo, P., Girardi, L., et al. 2012, ArXiv e-prints Catchpole, R. M., Robertson, B. S. C., Lloyd-Evans, T. H. H., et al. 1979, South African Astronomical Observatory Circular, 1, 61 Chesneau, O. 2007, New A Rev., 51, 666 Claussen, M. J., Kleinmann, S. G., Joyce, R. R., & Jura, M. 1987, ApJS, 65, 385 Cohen, M., Wheaton, W. A., & Megeath, S. T. 2003, AJ, 126, 1090 Cox, A. 2000, Allen’s Astrophysical Quantities (Springer) Cruzalèbes, P., Lopez, B., Bester, M., Gendron, E., & Sams, B. 1998, A&A, 338, 132 Cutri, R. M., Skrutskie, M. F., van Dyk, S., et al. 2003, VizieR Online Data Catalog, 2246, 0 de Graauw, T., Haser, L. N., Beintema, D. A., et al. 1996, A&A, 315, L49 de Vegt, C. 1974, A&A, 34, 457 Dunham, D. W., Evans, D. S., Silverberg, E. C., & Wiant, J. R. 1975, MNRAS, 173, 61P Dyck, H. M., van Belle, G. T., & Benson, J. A. 1996, AJ, 112, 294 Fouque, P., Le Bertre, T., Epchtein, N., Guglielmo, F., & Kerschbaum, F. 1992, A&AS, 93, 151 Gautschy-Loidl, R., Höfner, S., Jørgensen, U. G., & Hron, J. 2004, A&A, 422, 289 Goorvitch, D. & Chackerian, Jr., C. 1994, ApJS, 91, 483 Harris, G. J., Pavlenko, Y. V., Jones, H. R. A., & Tennyson, J. 2003, MNRAS, 344, 1107 Harris, G. J., Tennyson, J., Kaminsky, B. M., Pavlenko, Y. V., & Jones, H. R. A.

2006, MNRAS, 367, 400 Hauschildt, P. H., Allard, F., Ferguson, J., Baron, E., & Alexander, D. R. 1999, ApJ, 525, 871 Höfner, S., Gautschy-Loidl, R., Aringer, B., & Jørgensen, U. G. 2003, A&A, 399, 589 Iben, Jr., I. & Renzini, A. 1983, ARA&A, 21, 271 Ireland, M. J., Scholz, M., & Wood, P. R. 2008, MNRAS, 391, 1994 Ireland, M. J., Scholz, M., & Wood, P. R. 2011, MNRAS, 418, 114 Jaffe, W. J. 2004, in Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 5491, Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, ed. W. A. Traub, 715 Johnson, H. L., Mitchell, R. I., Iriarte, B., & Wisniewski, W. Z. 1966, Communications of the Lunar and Planetary Laboratory, 4, 99 Jørgensen, U. G. 1997, in IAU Symposium, Vol. 178, IAU Symposium, ed.

E. F. van Dishoeck, 441–456

Klotz et al.: Constraining stellar parameters for TX Psc

Fig. 9. Zoom into the AGB region of the H-R diagram. Lines denote solar metallicity evolutionary tracks (Marigo et al., in prep.) and numbers indicate the mass on the early-AGB. Yellow/grey lines mark the region of carbon-rich AGB stars with C/O>1.0. Black lines mark the region of oxygen-rich AGB stars (C/O≤1). For better visibility, the track of the 2 M_⊙ model is plotted with a dotted line. Different colored symbols refer to the luminosity and effective temperature determined in this work (for the two different approaches A1 and A2 at visual minimum/maximum).

Jorgensen, U. G., Almlöf, J., & Siegbahn, P. E. M. 1989, ApJ, 343, 554 Jørgensen, U. G., Hron, J., & Loidl, R. 2000, A&A, 356, 253 Jorissen, A., Mayer, A., van Eck, S., et al. 2011, A&A, 532, A135 Karakas, A. I., Lattanzio, J. C., & Pols, O. R. 2002, PASA, 19, 515 Kerschbaum, F. & Hron, J. 1996a, A&A, 308, 489 Kerschbaum, F., Lazaro, C., & Habison, P. 1996b, A&AS, 118, 397 Klotz, D., Sacuto, S., Kerschbaum, F., et al. 2012a, A&A, 541, A164 Klotz, D., Sacuto, S., Paladini, C., Hron, J., & Wachter, G. 2012b, ArXiv e-prints Kurucz, R. 1993, Limbdarkening for 2 km/s grid (No. 13): [+0.0] to [-5.0]. Kurucz CD-ROM No. 17. Cambridge, Mass.: Smithsonian Astrophysical Observatory, 1993., 17 Lambert, D. L., Gustafsson, B., Eriksson, K., & Hinkle, K. H. 1986, ApJS, 62, 373 Lasker, B. M., Bracker, S. B., & Kunkel, W. E. 1973, PASP, 85, 109 Le Bertre, T. 1988, A&A, 190, 79 Leinert, C., Graser, U., Przygodda, F., et al. 2003, Ap&SS, 286, 73 Leinert, C., van Boekel, R., Waters, L. B. F. M., et al. 2004, A&A, 423, 537 Loidl, R., Lançon, A., & Jørgensen, U. G. 2001, A&A, 371, 1065 Marigo, P. & Aringer, B. 2009, A&A, 508, 1539 Marigo, P. & Girardi, L. 2007, A&A, 469, 239 Martí-Vidal, I., Marcaide, J. M., Quirrenbach, A., et al. 2011, A&A, 529, A115 Mendoza V., E. E. & Johnson, H. L. 1965, ApJ, 141, 161 Neilson, H. R. & Lester, J. B. 2008, A&A, 490, 807 Noguchi, K., Kawara, K., Kobayashi, Y., et al. 1981, PASJ, 33, 373 Ohnaka, K., Tsuji, T., & Aoki, W. 2000, A&A, 353, 528 Olofsson, H., Eriksson, K., Gustafsson, B., & Carlstroem, U. 1993, ApJS, 87, 305 Paladini, C., Aringer, B., Hron, J., et al. 2009, A&A, 501, 1073 Paladini, C., van Belle, G. T., Aringer, B., et al. 2011, A&A, 533, A27 (P11) Querci, F., Querci, M., & Tsuji, T. 1974, A&A, 31, 265 Quirrenbach, A., Mozurkewich, D., Hummel, C. A., Buscher, D. F., & Armstrong, J. T. 1994, A&A, 285, 541 Ragland, S., Traub, W. A., Berger, J.-P., et al. 2006, ApJ, 652, 650 Ratzka, T. 2005, PhD thesis, Max-Planck-Institute for Astronomy, Königstuhl 17, 69117 Heidelberg, Germany

Richichi, A., Chandrasekhar, T., Lisi, F., et al. 1995, A&A, 301, 439 Sacuto, S., Aringer, B., Hron, J., et al. 2011a, A&A, 525, A42 Sacuto, S., Jorissen, A., Cruzalèbes, P., et al. 2011b, in Astronomical Society of the Pacific Conference Series, Vol. 445, Why Galaxies Care about AGB Stars II: Shining Examples and Common Inhabitants, ed. F. Kerschbaum, T. Lebzelter, & R. F. Wing, 171 Samus, N. N., Durlevich, O. V., & et al. 2009, VizieR Online Data Catalog, 1, 2025 Scholz, M. 2003, in Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 4838, Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, ed. W. A. Traub, 163–171 Sloan, G. C., Kraemer, K. E., Price, S. D., & Shipman, R. F. 2003, ApJS, 147, 379 van Leeuwen, F. 2007, A&A, 474, 653 Wamsteker, W. 1981, A&A, 97, 329 Wittkowski, M., Boboltz, D. A., Driebe, T., et al. 2008, A&A, 479, L21 Wittkowski, M., Boboltz, D. A., Ireland, M., et al. 2011, A&A, 532, L7 Wittkowski, M., Hummel, C. A., Johnston, K. J., et al. 2001, A&A, 377, 981

Klotz et al.: Constraining stellar parameters for TX Psc, Online Material p 1

Table 2. Properties of the calibrator targets.

HD Name Sp. T.^a F_{12}^a θ^b [Jy] [mas] HD 48915 Sirius A1 143.1±3 6.08±0.03 HD 20720 τ04 Eri M3/M4 162.7±6 10.14±0.04 HD 224935 YY Psc M3 86.9±5 7.25±0.03 HD 49161 17 Mon K4 10.4±5 2.44±0.01 HD 18884 α Cet M1.5 234.7±3 12.28±0.05 HD 45348 Canopus F0 154.8±3 6.87±0.03

Notes.^{(a)} http://www.eso.org/observing/dfo/quality/MIDI/qc/ calibrators obs.html (b) http://simbad.u-strasbg.fr/simbad/

Klotz et al.: Constraining stellar parameters for TX Psc, Online Material p 2

Table 1. Journal of MIDI observations of TX Psc sorted for projected baseline length.

# Object Date/Time Configuration Proj.Base Proj.Angle Obs. seeing Airmass [m] [^∘] [^{′′}] 1 TXPSC 2006-08-28 02:50 E0-G0 9.4 81 1.41 1.718 2 TXPSC^a 2006-10-19 00:19 E0-G0 11.9 70 1.387 HD48915 2006-10-19 08:26 . . . . . . . . . 0.57 1.325 3 TXPSC 2006-10-18 05:46 E0-G0 13.2 66 0.89 1.659 HD48915 2006-10-18 06:57 . . . . . . . . . 0.87 1.278 4 TXPSC 2005-06-29 08:55 E0-G0 13.7 82 0.54 1.238 5 TXPSC 2010-09-07 04:13 E0-G0 14.4 73 0.93 1.194 6 TXPSC 2006-08-28 05:48 E0-G0 15.6 73 1.30 1.136 7 TXPSC 2009-11-15 02:18 E0-G0 15.7 72 1.26 1.225 8 TXPSC^a 2006-10-18 03:18 E0-G0 16.0 73 1.00 1.149 HD48915 2006-10-18 06:57 . . . . . . . . . 0.87 1.278 9 TXPSC 2006-09-20 02:28 D0-G0 25.1 71 1.21 1.327 10 TXPSC 2006-09-20 03:23 D0-G0 29.0 73 1.90 1.189 11 TXPSC 2006-10-16 02:12 H0-G0 30.5 73 0.67 1.150 12 TXPSC 2009-11-16 02:13 H0-G0 31.0 72 0.95 1.219 13 TXPSC 2006-09-20 05:47 D0-G0 31.6 72 1.64 1.201 HD20720 2006-09-20 09:48 . . . . . . . . . 0.89 1.095 14 TXPSC 2009-11-16 01:20 H0-G0 32.0 73 1.36 1.146 15 TXPSC 2006-09-21 01:48 K0-G0 44.0 68 1.01 1.489 16 TXPSC^a 2006-09-21 03:32 K0-G0 59.3 73 1.02 1.169 HD48915 2006-09-21 08:36 . . . . . . . . . 1.51 1.309 17 TXPSC 2006-09-17 04:20 A0-G0 62.0 73 1.36 1.140 18 TXPSC^a 2006-09-21 05:55 K0-G0 62.6 72 1.39 1.225 HD48915 2006-09-21 08:36 . . . . . . . . . 1.51 1.309 19 TXPSC 2008-09-27 04:45 G1-D0 63.6 133 1.00 1.155 20 TXPSC 2006-08-17 07:00 A0-G0 63.8 73 0.39 1.137 HD224935 2006-08-17 07:23 . . . . . . . . . 0.43 1.060 21 TXPSC 2004-10-30 03:28 UT2-UT4 84.3 80 0.78 1.244 HD49161 2004-10-30 09:19 . . . . . . . . . 0.72 1.196 22 TXPSC 2006-08-16 07:06 A0-G1 87.1 113 0.85 1.137 HD18884 2006-08-16 07:57 . . . . . . . . . 0.81 1.353 23 TXPSC 2006-08-15 06:20 A0-G1 90.3 113 0.88 1.145 24 TXPSC 2011-09-21 05:39 I1-A1 104.0 84 1.03 1.186 25 TXPSC 2011-10-05 04:21 K0-A1 129.0 67 0.57 1.158 26 TXPSC^a 2011-10-02 05:44 A1-J3 140.0 46 1.02 1.305 HD45348 2011-10-02 06:42 . . . . . . . . . 0.88 1.512

Notes. Calibrators that are used to calibrate the data are given below the science target. The baseline configuration, projected baseline length and position angle of the observations are given. The observatory seeing and airmass give the average atmospheric conditions present at the observatory during the observation. Observations that are used in the astrophysical interpretation are marked in boldface. (a) Calibrated spectrum available