arXiv:1301.3740v2 [astro-ph.HE] 5 Aug 2013

IPN localizations of Konus short gamma-ray bursts

V. D. Pal’shin^1, K. Hurley^2, D. S. Svinkin^1, R. L. Aptekar^1, S. V. Golenetskii^1, D. D. Frederiks^1, E. P. Mazets^{1,3}, P. P. Oleynik^1, M. V. Ulanov^1, T. Cline^{4,29}, I. G. Mitrofanov^5, D. V. Golovin^5, A. S. Kozyrev^5, M. L. Litvak^5, A. B. Sanin^5, W. Boynton^6, C. Fellows^6, K. Harshman^6, J. Trombka^4, T. McClanahan^4, R. Starr^4, J. Goldsten^7, R. Gold^7, A. Rau^8, A. von Kienlin^8, V. Savchenko^9, D. M. Smith^{10}, W. Hajdas^{11}, S. D. Barthelmy^4, J. Cummings^{12,30}, N. Gehrels^4, H.

Krimm^{12,31}, D. Palmer^{13}, K. Yamaoka^{14}, M. Ohno^{15}, Y. Fukazawa^{15}, Y. Hanabata^{15}, T. Takahashi^{14}, M. Tashiro^{16}, Y. Terada^{16}, T. Murakami^{17}, K. Makishima^{18}, M. S. Briggs^{19}, R. M.

Kippen^{13}, C. Kouveliotou^{20}, C. Meegan^{21}, G. Fishman^{20}, V. Connaughton^{19}, M. Boër^{22}, C. Guidorzi^{23}, F. Frontera^{23,32}, E. Montanari^{23,33}, F. Rossi^{23}, M. Feroci^{24}, L. Amati^{25}, L. Nicastro^{25}, M. Orlandini^{25}, E. Del Monte^{24}, E. Costa^{24}, I. Donnarumma^{24}, Y. Evangelista^{24}, I. Lapshov^{24}, F.

Lazzarotto^{24}, L. Pacciani^{24}, M. Rapisarda^{24}, P. Soffitta^{24}, G. Di Cocco^{25}, F. Fuschino^{25}, M.

Galli^{26}, C. Labanti^{25}, M. Marisaldi^{25}, J.-L. Atteia^{27}, R. Vanderspek^{28}, G. Ricker^{28}

– 2 –

1Ioffe Physical Technical Institute, St. Petersburg, 194021, Russian Federation

val@mail.ioffe.ru

2Space Sciences Laboratory, University of California, 7 Gauss Way, Berkeley, CA 94720-7450, USA 3Deceased 4NASA Goddard Space Flight Center, Greenbelt, MD 20771, USA 5Space Research Institute, 84/32, Profsoyuznaya, Moscow 117997, Russian Federation 6Department of Planetary Sciences, University of Arizona, Tucson, Arizona 85721, USA 7Applied Physics Laboratory, Johns Hopkins University, Laurel, MD 20723, USA 8Max-Planck-Institut für extraterrestrische Physik, Giessenbachstrasse, Postfach 1312, Garching, 85748 Germany 9François Arago Centre, APC, Université Paris Diderot, CNRS/IN2P3, CEA/Irfu, Observatoire de Paris, Sorbonne Paris Cité, 10 rue Alice Domon et Léonie Duquet, 75205 Paris Cedex 13, France 10Physics Department and Santa Cruz Institute for Particle Physics, University of California, Santa Cruz, Santa Cruz, CA 95064, USA

11Paul Scherrer Institute, 5232 Villigen PSI, Switzerland 12UMBC/CRESST/NASA Goddard Space Flight Center, Greenbelt, MD 20771, USA 13Los Alamos National Laboratory, Los Alamos, New Mexico 87545, USA 14Institute of Space and Astronautical Science (ISAS/JAXA), 3-1-1 Yoshinodai, Chuo-ku, Sagamihara, Kanagawa 252-5210, Japan

15Department of Physics, Hiroshima University, 1-3-1 Kagamiyama, Higashi-Hiroshima, Hiroshima 739-8526, Japan 16Department of Physics, Saitama University, 255 Shimo-Okubo, Sakura-ku, Saitama-shi, Saitama 338-8570, Japan 17Department of Physics, Kanazawa University, Kadoma-cho, Kanazawa, Ishikawa 920-1192, Japan 18Department of Physics, University of Tokyo, 7-3-1 Hongo, Bunkyo-ku, Tokyo 113-0033, Japan 19CSPAR and Physics Department, University of Alabama in Huntsville, Huntsville, AL 35899, USA 20Space Science Office, VP62, NASA Marshall Space Flight Center, Huntsville, AL 35812, USA 21Universities Space Research Association, 320 Sparkman drive, Huntsville, AL 35805 22Observatoire de Haute Provence (CNRS), 04870 Saint Michel l’Observatoire, France 23Physics Department, University of Ferrara, Via Saragat, 1, 44100 Ferrara, Italy 24INAF - Istituto di Astrofisica Spaziale e Fisica Cosmica, via Fosso del Cavaliere, Rome, I-00133, Italy 25INAF - Istituto di Astrofisica Spaziale e Fisica Cosmica di Bologna, via Gobetti 101, I-40129 Bologna, Italy 26ENEA-Bologna, Via Martiri Montesole, 4 I-40129 Bologna, Italy

– 3 –

ABSTRACT

Between the launch of the GGS Wind spacecraft in 1994 November and the end of 2010, the Konus-Wind experiment detected 296 short-duration gamma-ray bursts (including 23 bursts which can be classified as short bursts with extended emission). During this period, the IPN consisted of up to eleven spacecraft, and using triangulation, the localizations of 271 bursts were obtained. We present the most comprehensive IPN localization data on these events. The short burst detection rate, ∼18 per year, exceeds that of many individual experiments.

Subject headings: catalogs - gamma-ray burst: general - techniques: miscellaneous

1. INTRODUCTION

Between 1994 November and 2010 December, the Konus gamma-ray spectrometer aboard the Global Geospace Science Wind spacecraft detected 1989 cosmic gamma-ray bursts (GRBs) in the triggered mode, 296 of which were classified as short-duration gamma-ray bursts or short bursts with extended emission (EE). The classification was made based on the duration distribution of an unbiased sample of 1168 Konus-Wind GRBs. The instrument trigger criteria cause undersampling of faint short bursts relative to faint long bursts, so this subsample of fairly bright (in terms of peak count rate in Konus-Wind’s trigger energy band) bursts has been chosen for the purpose

27Université de Toulouse; UPS-OMP; CNRS; IRAP; 14, avenue Edouard Belin, F-31400 Toulouse, France 28Kavli Institute for Astrophysics and Space Research, Massachusetts Institute of Technology, 70 Vassar Street, Cambridge, MA 02139, USA.

29Emeritus 30UMBC Physics Department 1000 Hilltop Circle Baltimore, MD 21250, USA 31Universities Space Research Association, 10211 Wincopin Circle, Suite 500, Columbia, MD 20144, USA 32INAF/Istituto di Astrofisica Spaziale e Fisica Cosmica di Bologna, via Gobetti 101, 40129 Bologna, Italy 33Istituto IS Calvi, Finale Emilia (MO), Italy

– 4 –

of classification. Taking in account other characteristics of these short-duration bursts such as hardness ratio and spectral lag shows that about 16% of them can be in fact Type II (collapsarorigin), or at least their classification as Type I (merger-origin) is questionable (see Zhang et al. 2009 for more information on the Type I/II classification scheme). Nevertheless we consider here all 296 Konus-Wind short-duration and possible short-duration with EE bursts (hereafter we refer to them simply as Konus short bursts). Full details of the Konus-Wind GRB classification are given in Svinkin et al. (2013, in preparation).

Every short burst detected by Konus was searched for in the data of the spacecraft comprising the interplanetary network (IPN). We found that 271 (∼92%) of the Konus-Wind short GRBs were observed by at least one other IPN spacecraft, enabling their localizations to be constrained by triangulation.

The IPN contained between 3 and 11 spacecraft during this period. They were, in addition to Konus-Wind: Ulysses (the solar X-ray/cosmic gamma-ray burst instrument, GRB), in heliocentric orbit at distances between 670 and 3180 lt-s from Earth (Hurley et al. 1992); the Near-Earth Asteroid Rendezvous mission (NEAR) (the remote sensing X-ray/Gamma-Ray Spectrometer, XGRS; Trombka et al. 1999), at distances up to 1300 lt-s from Earth; Mars Odyssey (the Gamma-Ray Spectrometer (GRS) that includes two detectors with GRB detection capabilities, the gamma sensor head (GSH), and the High Energy Neutron Detector (HEND); Boynton et al. 2004; Hurley et al. 2006), launched in 2001 April and in orbit around Mars starting in 2001 October, up to 1250 lt-s from Earth (Saunders et al. 2004); Mercury Surface, Space Environment, Geochemistry, and Ranging mission (MESSENGER) (the Gamma-Ray and Neutron Spectrometer, GRNS; Goldsten et al. 2007), en route to Mercury (in Mercury orbit since March 2011), launched in 2004 August, but commencing full operation only in 2007, up to ∼700 lt-s from Earth (Gold et al. 2001; Solomon et al. 2007); the International Gamma-Ray Astrophysics Laboratory (INTEGRAL) (the anti-coincidence shield ACS of the spectrometer SPI, SPI-ACS; Rau et al. 2005), in an eccentric Earth orbit at up to 0.5 lt-s from Earth; and in low Earth orbits: the Compton Gamma-Ray Observatory (the Burst and Transient Source Experiment, BATSE; Fishman et al. 1992); BeppoSAX (the Gamma-Ray Burst

– 5 –

Monitor, GRBM; Frontera et al. 1997; Feroci et al. 1997); the Ramaty High Energy Solar Spectroscopic Imager (RHESSI ; Lin et al. 2002; Smith et al. 2002); the High Energy Transient Explorer (HETE-2 ) (the French Gamma-Ray Telescope, FREGATE; Ricker et al. 2003; Atteia et al. 2003); the Swift mission (the Burst Alert Telescope, BAT; Barthelmy et al. 2005; Gehrels et al. 2004); the Suzaku mission (the Wide-band All-sky Monitor, WAM; Yamaoka et al. 2009; Takahashi et al. 2007); AGILE (the Mini-Calorimeter, MCAL, and Super-AGILE) (Tavani et al. 2009); the Fermi mission (the Gamma-Ray Burst Monitor, GBM; Meegan et al. 2009), the Coronas-F solar observatory (Helicon) (Oraevskii et al. 2002), the Cosmos 2326 (Konus-A; Aptekar et al. 1998), Cosmos 2367 (Konus-A2), and Cosmos 2421 (Konus-A3) spacecraft, and the Coronas-Photon solar observatory (Konus-RF).

At least two other spacecraft detected GRBs during this period, although they were not used for triangulation and therefore were not, strictly speaking, part of the IPN. They are the Defense Meteorological Satellite Program (DMSP) (Terrell et al. 1996, 1998, 2004) and the Stretched Rohini Satellite Series (SROSS) (Marar et al. 1994).

Here we present the localization data obtained by the IPN for 271 Konus-Wind short bursts observed by at least one other IPN s/c. In a companion paper, we present the durations, energy spectra, peak fluxes, and fluences of these bursts.

2. OBSERVATIONS

For each Konus short gamma-ray burst, a search was initiated in the data of the IPN spacecraft. For the near-Earth spacecraft and INTEGRAL, the search window was centered on the Konus-Wind trigger time, and its duration was somewhat greater than the Wind distance from Earth. For the spacecraft at interplanetary distances, the search window was twice the light-travel time to the spacecraft if the event arrival direction was unknown, which was the case for most events. If the arrival direction was known, even coarsely, the search window was defined by calculating the expected arrival time at the spacecraft, and searching in a window around it.

– 6 –

The mission timelines and the number of Konus-Wind short GRBs observed by each mission/instrument are shown in Figure 1. In this study, the largest number of bursts detected by an IPN instrument, after Konus, was 139, detected by INTEGRAL (SPI-ACS).

Table 1 lists the 271 Konus-Wind short GRBs observed by the IPN. The first column gives the burst designation, ‘GRBYYYYMMDD Tsssss’, where YYYYMMDD is the burst date, and sssss is the Konus-Wind trigger time (s UT) truncated to integer seconds (Note that, due to Wind’s large distance from Earth, this trigger time can differ by up to 6.1 seconds from the Earth-crossing time; see below). The next two columns give the burst date and Konus-Wind trigger time in the standard date and time formats. The ‘Type’ column specifies the burst type following the classification given in Svinkin et al. (2013, in preparation). The types are: I (merger-origin), II (collapsar-origin), I/II (the type is uncertain), Iee (type I which shows extended emission), and Iee/II (the type is uncertain: Iee or II). The ‘Time delay’ column gives the propagation time delay from Wind to the Earth center and its 3σ uncertainty (calculated using the IPN localizations, presented in this catalog: see section 6.3). The ‘Observed by’ column lists the missions/instruments which observed the burst (detections by several instruments which are not part of the IPN have also been listed, namely COMPTEL on CGRO, DMSP, Fermi LAT, MAXI, (Monitor of All-sky X-ray Image), and SROSS (Stretched Rohini Satellite Series). The next two columns give the total number of IPN s/c and the number of the distant IPN s/c which observed the burst. The last column contains the comments.

During the period of consideration, four interplanetary s/c participated in the IPN: Ulysses, NEAR, Mars Odyssey, and MESSENGER. Of the 271 bursts listed in Table 1, 30 bursts were observed by two distant s/c, 102 by one distant s/c, and 139 were not observed by any distant s/c.

17 Konus short bursts were precisely localized by instruments with imaging capabilities, namely, Swift-BAT, HETE-2 (WXM and SXC), and INTEGRAL IBIS/ISGRI. For most of these bursts an X-ray afterglow has been detected; for some of them a redshift z has been determined based on the optical afterglow or host galaxy spectroscopy. We have used these bursts to verify our IPN triangulations (see section 4.3).

– 7 –

3. METHODOLOGY

When a GRB arrives at two spacecraft with a delay δT, it may be localized to an annulus whose half-angle θ with respect to the vector joining the two spacecraft is given by

cos θ = cδT D (1) where c is the speed of light and D is the distance between the two spacecraft. (This assumes that the burst is a plane wave, i.e., that its distance is much greater than D.)

The measured time delay has an uncertainty which is generally not symmetrical d_±(δT ), i.e., the measured time delay can take values from δT + d_−(δT ) to δT + d_+(δT ) (d_−(δT ) is negative) at a given confidence level.

The annulus half-widths dθ_±, are

dθ_± ≡ θ_± − θ = cos^{−1} [ c(δT + d_∓(δT )) D ] − cos^{−1} [ cδT D ] (2)

It should be noted that even in case of symmetrical errors |d_−(δT )| = d_+(δT ), the annulus can still be significantly asymmetrical if c(δT + d_±(δT ))/D ∼ 1 (i.e. the source is close to the vector joining the two spacecraft).

For the case d(δT ) ≪ D/c Eq. (2) reduces to commonly used expression: dθ_± = − cd_∓(δT ) D sin θ (3)

To derive the most probable time delay δT and its uncertainty d_±(δT ) we have used the χ^2 method described in Hurley et al. (1999a) for triangulations with distant s/c and this method with some modifications for Konus-Wind-near-Earth s/c (or INTEGRAL) triangulations.

Given a burst time history recorded by two instruments, the most probable time lag τ and its uncertainty d_±(τ) can be estimated as follows. Let n_{1,i} = n(t_{1,i}), n_{2,j} = n(t_{2,j} ) and σ_{1,i}, σ_{2,j} denote background-subtracted counts and their uncertainties measured by two instruments at evenly spaced intervals t_{1,i} = t_{01} + iΔ_1, t_{2,j} = t_{02} + jΔ_2, where i = 0, .., m_1, j = 0, .., m_2; and Δ_1,

– 8 –

Δ_2 are the bin sizes and t_{01}, t_{02} are the absolute reference times (UT). To make things simpler, suppose Δ_1 = Δ_2 = Δ. Usually one assumes Poisson statistics, so σ_{1(2),i} = n^{1/2}_{tot1(2),i}, where n_{tot1(2),i} is the total number of counts (source + background) in the i-th bin. Let us assume that both time histories contain the burst of interest along with some intervals before and after it (if they do not exist they can always be added and padded with zeros with the background variance), and N + 1 bins from i_{start} contain the burst (or the part of the burst we want to cross-correlate) in the second time history. Let us construct the statistic:

R^2(τ ≡ kΔ) = i=i_{start}+N ∑ i=i_{start} (n_{2,i} − sn_{1,i+k})^2 (σ^2_{,i} + s^2σ^2_{1,i+k}) (4) Where s is the scaling factor estimated as a ratio of the burst counts detected by the instruments s = ∑ i n_{1,i}/ ∑ j n_{2,j}. In the perfect case of identical detectors, with identical energy ranges and arrival angles, and Poisson statistics, R^2 is distributed as χ^2 with N degrees of freedom (dof). In practice, there are several complicating factors. The detectors have different energy ranges, different responses, and operate in different background environments. Fortunately, for short GRBs some of these complicating factors are less important: a) the background variation on short time scales is small, and b) different spectral evolutions which produce a significant lag between light curves measured in different energy bands, is almost absent in short GRBs (e.g., Norris, Scargle, & Bonnell 2001).

To account for all deviations from the perfect case we adopt the following approach: for a given N (the number of bins used to construct R^2) we calculate χ^2(N) corresponding to the 3σ confidence level (that is, χ^2 for which the chi-square probability function Q(χ^2|N) = 2.7 × 10^{−3}), and adopt the corresponding 3σ level for the reduced R^2_r (≡ R^2/N) of

R^2_{r,3σ} = χ^2_{r,3σ}(N) + R^2_{r,min} − 1 (5)

where R^2_{r,min} is the minimum of R^2_r (τ); 1 is subtracted, since R^2_{r,min} ∼ 1 for the perfect case (in practice it is often > 1 and hence, R^2_{r,3σ} > χ^2_{r,3σ}(N)). To identify the 3σ confidence interval for τ, we use the nearest points of the R^2_r (τ) curve above the 3σ level given by Eq. (5) - see the examples in Figure 2. After the time lag τ and its errors d_±(τ) have been found, the time delay and its

– 9 –

uncertainty can be calculated as δT = t_{02} − t_{01} + τ; d_±(δT ) = d_±(τ) (here we assume there is no error in the absolute times t_{01} and t_{02}). For simplicity we will further refer to R^2 as χ^2.

4. LOCALIZATIONS: TRIANGULATION ANNULI

Using the above methodology one or more triangulation annuli have been obtained for 271 Konus-Wind short bursts. Specific details on the time delay determination for different pairs of instruments are given in the subsections below.

4.1. Annuli involving distant s/c

Distant (interplanetary) spacecraft play an important role in GRB triangulation. Their long baselines make it possible to derive very small error boxes for many bursts. However, the detectors aboard these missions tend to be smaller than ones in orbits closer to Earth, and in some cases, are not dedicated GRB detectors, but rather, are planetary experiments which have GRB detection modes. Thus, they may have coarser time resolution and less sensitivity. Also, the spacecraft clocks on these missions are not always calibrated to UTC as accurately as the ones on missions closer to Earth (or their calibration cannot be determined as accurately). In the present catalog, the data of four interplanetary missions have been used: Ulysses, NEAR, Mars Odyssey, and MESSENGER. Of the four, only Ulysses had a dedicated GRB experiment. The time resolutions of the four ranged from 32 ms (Ulysses, triggered mode) to 1 s (MESSENGER, NEAR). When a short GRB is detected by an experiment with time resolution much greater than the burst duration, the result is usually an increase in the count rate in a single time bin, which means that the timing uncertainty is approximately one-half of the larger time resolution. The accuracy of the spacecraft clocks have been verified in two ways. For Ulysses, commands were sent to the GRB experiment at accurately known times, and, taking light-travel time and delays aboard the spacecraft into account, the timing could be verified to between several milliseconds and 125 milliseconds. (Although we believe that the timing was accurate to several milliseconds, technical issues often prevented us from verifying

– 10 –

it.) In addition, the timing of all the interplanetary missions can be verified using triangulation of transient sources whose positions are well known by other means: soft gamma-ray repeaters (SGRs) are one possibility, and GRBs localized by the Swift XRT or UVOT, for example, are another. For the purposes of this catalog, we have taken the extremely conservative approach that no 3σ cross-correlation uncertainty is less than 125 ms.

In total 132 Konus short bursts were observed by distant s/c: 30 by two distant s/c and 102 by one distant s/c. Among them 9 were precisely localized by instruments with imaging capabilities. We do not give here distant s/c annuli for these 9 bursts since they do not improve the precise localizations.

As a result 150 annuli have been obtained using the distant s/c data (two distant annuli for 27 bursts and one distant annulus for 96 bursts). Some of them have already been presented in the IPN catalogs: for BATSE bursts in Hurley et al. (1999a,b, 2011a), for BeppoSAX bursts in Hurley et al. (2010a), and for HETE-2 bursts in Hurley et al. (2011b).

The histogram of Figure 3 shows the distribution of 3σ half-widths (HWs) of these 150 annuli. The smallest HW is 0.^∘0024 (0.14^′), the largest is 2.^∘21, the mean is 0.^∘099 (5.9^′), and the geometrical mean is 0.^∘028 (1.7^′).

4.2. Annuli involving Konus-Wind, INTEGRAL, and a near-Earth s/c

The Konus-Wind (hereafter KW ) experiment plays a special role in the IPN thanks to its unique set of characteristics: continuous coverage of the full sky by two omnidirectional spectrometers, orbit in interplanetary space that provides an exceptionally stable background, wide energy range (10 keV – 10 MeV nominal; ∼20 keV – 15 MeV at the present time), and a rather high sensitivity of about 10^{−7} erg cm^{−2}. The KW duty cycle, defined as the time for data recovered divided by the total operational time of the experiment, is about 95%. It has observed most of the IPN events, providing an important vertex in the IPN at a distance of ≃1–7 lt-s (see Figure 4).

In the triggered mode KW records a burst time history in three energy ranges G1, G2, G3

– 11 –

with nominal bounds 10–50 keV, 50–200 keV, and 200–750 keV, with a variable time resolution from 2 ms up to 256 ms (for more details see Aptekar et al. 1995). The time interval with the finest time resolution of 2 ms runs from T_0-0.512 s to T_0+0.512 s (T_0 is the trigger time) and in most cases covers the whole short burst, or at least its most intense pulse, thereby allowing very accurate cross-correlation with light curves of other instruments.

The KW clock is accurate to better than 1 ms, and this accuracy has been extensively verified by triangulation of many SGR bursts and GRBs.

The best results for cross-correlation with KW (i.e., minimum uncertainties in derived time delays) are provided by near-Earth s/c with high effective areas, namely CGRO BATSE, BeppoSAX GRBM, INTEGRAL-SPI-ACS, Suzaku-WAM, Swift-BAT, and Fermi-GBM.

At present, triangulation with Fermi-GBM usually provides the best result (the narrowest annulus) thanks to the similar designs of the KW and GBM detectors (NaI(Tl) scintillators), the high effective area of the GBM (several hundred cm^2 for the combination of several NaI(Tl) detectors), and photon time-tagging in 128 energy channels, that allows GBM light curves to be obtained in the same energy ranges as KW light curves with any desired time binning.

Since the clocks of most of the near-Earth instruments are very accurate, high count statistics combined with fine time resolution often results in an uncertainty in time delays as low as several milliseconds. Therefore, despite the rather small distance between KW and near-Earth s/c of several lt-s, the resulting relative error in time delay, d_±(δT )/D, which determines the width of the annulus (see Eq. (2,3)) can be comparable to or sometimes even smaller than for annuli involving distant s/c. Such small uncertainties of several ms, and hence narrow annuli, can often be derived for short bursts with sharp peaks or very fast rise and/or decay times. On the other hand, bursts with smooth single-pulse light curves usually give rather large cross-correlation uncertainties in time delays, and hence, rather wide triangulation annuli.

For Wind, INTEGRAL, and near-Earth s/c, ephemeris uncertainties are negligible compared to uncertainties in time delays and we do not take them in account.

– 12 –

In total 356 KW -near-Earth s/c and KW-INTEGRAL annuli have been obtained. The histograms of Figure 5 show the distributions of uncertainties in time delays and 3σ half-widths of these annuli. The smallest time delay uncertainty is 2 ms, the largest is 504 ms, the mean is 43 ms, and the geometrical mean is 23 ms. The smallest 3σ half-width is 0.^∘027 (1.6^′), the largest is 32.^∘2, the mean is 1.^∘30, and the geometrical mean is 0.^∘43.

In the following subsections some details on triangulation involving KW, INTEGRAL, and the near-Earth s/c are given.

4.2.1. KW-CGRO (BATSE) triangulations

The Burst and Transient Source Experiment (BATSE) was a high-energy astrophysics experiment aboard the Compton Gamma Ray Observatory (CGRO) (Fishman et al. 1992). Its Large Area Detectors (LADs) measured burst time histories in four energy channels Ch1, Ch2, Ch3, Ch4, with approximate channel boundaries: 25-55 keV, 55-110 keV, 110-320 keV, and >320 keV. The clock on the CGRO is accurate to 100 μs, and this accuracy was verified through pulsar timing. Onboard software increases the uncertainty in the BATSE trigger times to ≃1 ms.

BATSE observed 52 KW short GRBs: 44 in the triggered mode, and 8 in the real-time mode. We derived KW -BATSE annuli for the 44 KW short bursts observed in the triggered mode and for 6 bursts observed by BATSE in real-time mode (these bursts were observed by only KW and BATSE).

For cross-correlation with triggered BATSE bursts we utilized KW light curves in the G2+G3 or in the G2 band with 2 or 16-ms resolution and BATSE concatenated light curves (DISCLA, PREB, and DISCSC data types) in the Ch2+Ch3+Ch4 or in the Ch2+Ch3 band with a time resolution of 64 ms. For several GRBs such light curves are not available and we utilized other types of BATSE data. Usually we tried different energy bands to check the consistency of the derived time delay and finally chose those with minimum χ^2. The cross-correlation curves for different bands may be slightly shifted relative each other (by several ms) but the 3σ intervals for

– 13 –

cross-correlation lag τ are always in good agreement.

The resulting χ^2_{r,min} range from 0.06 to 4.51 with a mean of 0.81. The maximum χ^2_{r,min} of 4.51 (dof=6) is a clear outlier in the distribution of bursts over χ^2_{r,min}. It corresponds to the exceptionally intense GRB19970704 T04097 (BATSE #6293) with a peak count rate of 1.8 × 10^5 counts s^{−1} (KW 2-ms time scale) and 6.9 × 10^5 counts s^{−1} (BATSE 64-ms time scale). Both light curves (KW and BATSE) must be significantly distorted due to dead-time and pile-up effects. The derived statistical uncertainty in the time delay is only 3 ms, so we added 6 ms systematic uncertainty to account for the distortions.

The derived uncertainties in the time delays range from 5 ms to 84 ms with a mean of 24 ms, and a geometrical mean of 18 ms. The resulting annuli 3σ half-widths range from 0.^∘082 to 11.^∘0 with a mean of 1.^∘14, and a geometrical mean of 0.^∘60. The widest annulus with half-width of 11.^∘0 was obtained for GRB19991001 T04950 (BATSE #7781) – at that time Wind was only 0.34 lt-s from Earth.

The distances between the center lines of the KW -BATSE annuli and the centers of BATSE locations range from 0.^∘007 to 7.^∘7 with a mean of 2.^∘23. For 14 bursts the BATSE error circle does not intersect the KW -BATSE annulus and the distances from the closest boundary of the annulus range from 1.02σ to 7.2σ^1.

Of the 52 bursts, 16 were observed by only KW and BATSE, and 12 were observed by only KW, BATSE, and BeppoSAX. For these bursts, we constrained the burst location to a segment of the KW -BATSE annulus using the following method. We took the center of the segment to be the point on the annulus center line nearest to the center of the BATSE position, and then we derived the corners of the segment from the intersection of the annulus and a circle centered at this point

1For GRB19961225 T36436 (BATSE #5725) the BATSE position given in the current BATSE catalog (R.A., Decl.(J2000), Err = 171.^∘ 31, -2.^∘85, 1.^∘ 5) is 25.^∘ 2 away from the center line of the 1.^∘6 wide KW -BATSE annulus. This GRB is a “mirror” case for BATSE, with a bimodal probability distribution for the location. The alternative solution is R.A., Decl.(J2000) = 141.^∘ 4, -5.^∘5, with a statistical error of 1.^∘8 (M. Briggs, private communication, 2011). This position is 7.^∘3 away from the center line of the KW -BATSE annulus. We use this alternative BATSE position here.

– 14 –

with a radius equal to the sum of twice the BATSE 1σ error and a systematic error, taken to be the larger of 2.^∘0 and the distance between the BATSE position and the center line of the annulus (a core systematic error of ≃ 2^∘ was found for BATSE locations: see Briggs et al. 1999). This is illustrated in Figure 6.

4.2.2. KW-Fermi (GBM) triangulations

The Gamma-Ray Burst Monitor (GBM) aboard the Fermi observatory is primarily designed to study of GRBs by making observations in the ∼8 keV – 40 MeV band (Meegan et al. 2009). The GBM has the advantage of high effective area and time-tagged data. The absolute timing of the GBM clock has an accuracy better than 20μs. The GBM TTE data contain counts in 128 energy channels from ∼5 keV to 2 MeV, which enables the preparation of the GBM light curve in three energy channels which are nearly the same as those of KW.

GBM observed 34 KW short GRBs. We derived KW -GBM triangulation annuli for all of them.

For cross-correlation we utilized KW light curves in the G2+G3 or in the G2 band with 2 or 16-ms resolution and GBM light curves with 1 or 16 ms resolution made from the TTE data (only NaI data were used).

The resulting χ^2_{r,min} range from 0.16 to 2.10 with a mean of 0.90. The derived uncertainties in the time delays range from 2.5 ms to 136 ms with a mean of 22 ms, and a geometrical mean of 15 ms. The resulting annuli 3σ half-widths range from 0.^∘035 (2.1^′) to 1.^∘65 with a mean of 0.^∘35, and a geometrical mean of 0.^∘23.

4.2.3. KW-INTEGRAL (SPI-ACS) triangulations

The Anti-Coincidence Shield (ACS) of the SPI instrument on-board INTEGRAL, besides serving to veto the background in the germanium spectrometer, is routinely used as a nearly omnidirec-

– 15 –

tional detector for gamma-ray bursts (von Kienlin et al. 2003). It measures burst light curves with a time resolution of 50 ms in a single energy range above ∼80 keV (for more details see Lichti et al. 2000). A systematic error in the ACS timing of 125±10 ms has been found (Rau et al. 2004) and all SPI-ACS lc have been corrected automatically for this error after 2004 April; corrections for it were applied by hand to the data prior to this date.

This systematic uncertainty is related to the approximate nature of conversion from on-board time to UTC used in the producing SPI-ACS light curves in real time (within just seconds after the event at ftp://isdcarc.unige.ch/arc/FTP/ibas/spiacs/).

On the other hand, the time conversion used in archived and near real-time data is precise. Recently it was shown that the drift of the ACS clock with respect to the germanium detector clock during the whole INTEGRAL mission is around 1 ms (Zhang et al. 2010), thereby reducing the systematic uncertainty of ACS timing from 10 ms to 1 ms.

SPI-ACS light curves corrected for systematic shifts and characterized by high timing precision (at least down to 1 ms) are available in the INTEGRAL data archive since revision 3. The archived and equally precise near real-time data (available within hours after the observation) are accessible through web services http://isdc.unige.ch/~{}savchenk/spiacs-online/ and

http://www.isdc.unige.ch/heavens/. They are routinely used for near real-time triangulation.

SPI-ACS observed 139 KW short GRBs. We derived KW -SPI-ACS annuli for 103 of them. For cross-correlation we utilized KW light curves in the G2+G3 or in the G3 band with 2 or 16-ms resolution.

The resulting χ^2_{r,min} range from 0.04 to 3.96 with a mean of 1.02. The derived uncertainties in the time delays range from 4 ms to 175 ms with a mean of 24 ms, and a geometrical mean of 19 ms. The resulting annuli 3σ half-widths range from 0.^∘047 (2.8^′) to 4.^∘3 with a mean of 0.^∘41, and a geometrical mean of 0.^∘29.

– 16 –

4.2.4. KW-Suzaku (WAM) triangulations

The Wide-band All-sky Monitor (WAM) is the active shield of the Hard X-ray detector aboard the Suzaku mission (Yamaoka et al. 2009). In the triggered mode it measures light curves with a time resolution of 1/64 s in four energy channels which cover the ≃50–5000 keV range. In the real-time mode the time resolution is 1 s.

It was established that the Suzaku-WAM timing is consistent with negligible systematic uncertainties (Yamaoka et al. 2009).

WAM observed 61 KW short GRBs: 51 in the triggered mode and 10 in the real-time mode. We derived KW -WAM annuli for 45 triggered bursts.

For cross-correlation we utilized KW light curves in the G2+G3 or in the G3 band with 2 or 16-ms resolution and WAM light curves summed over four energy channels of 1 to 4 WAM detectors with the strongest response.

The resulting χ^2_{r,min} range from 0.21 to 1.78 with a mean of 1.03. The derived uncertainties in the time delays range from 4 ms to 104 ms with a mean of 20 ms, and a geometrical mean of 14 ms. The resulting annuli 3σ half-widths range from 0.^∘060 (3.6^′) to 2.^∘44 with a mean of 0.^∘30, and a geometrical mean of 0.^∘21.

4.2.5. KW-BeppoSAX (GRBM) triangulations

The BeppoSAX Gamma-Ray Burst Monitor (GRBM) was the anticoincidence shield of the high energy experiment PDS (Phoswich Detection System; Frontera et al. 1997).

In the triggered mode it measured light curves with a time resolution of 7.8125 ms in the 40– 700 keV range; in the real-time mode the time-resolution was 1 s (for more details see Frontera et al. 2009).

GRBM observed 50 KW short GRBs: 41 in the triggered mode and 9 in the real-time mode.

– 17 –

We derived KW -GRBM annuli for 38 bursts observed in the triggered mode and for one burst observed in the real-time mode (this burst was observed by only KW and GRBM).

For cross-correlation we utilized KW light curves in the G2 or in the G2+G3 band with 2 or 16-ms resolution and GRBM light curves rebinned to 32 ms.

The resulting χ^2_{r,min} range from 0.25 to 12.1 with a mean of 1.43. The maximum χ^2_{r,min} of 12.1 (dof=6) is a clear outlier in the distribution of bursts over χ^2_{r,min}. It corresponds to the exceptionally intense GRB19970704 T04097 with a peak count rate of 1.8×10^5 counts s^{−1} (KW 2-ms time scale) and 1.5×10^5 counts s^{−1} (GRBM 32-ms time scale). Both light curves (KW and GRBM) must be significantly distorted due to dead-time and pile-up effects. The derived statistical uncertainty in the time delay is only 2 ms, so we increased this uncertainty to 6 ms to account for the distortions.

The derived statistical uncertainties in the time delays range from 4.5 ms to 216 ms with a mean of 32 ms, and a geometrical mean of 18 ms.

Comparison of the initially derived annuli with other available IPN annuli as well as comparison of the GRBM and BATSE light curves for common bursts has revealed a systematic error in the GRBM timing up to 100 ms. Since this error varies from burst to burst (both in value and in sign), we had to introduce 100 ms systematic error for KW -SAX triangulations. This leads to a significant broadening of the annuli, so their final 3σ half-widths range from 1.^∘23 to 32.^∘2 with a mean of 5.^∘30, and a geometrical mean of 3.^∘87.

4.2.6. KW-Swift (BAT) triangulations

The Swift Burst Alert Telescope (BAT) is a highly sensitive, large field of view (FOV) coded aperture telescope that detects and localizes GRBs in real time (Barthelmy et al. 2005). When a burst occurs outside its FoV, it cannot be imaged, but the BAT light curve can be used for triangulation. For such bursts the 64 ms light curves in the four standard BAT energy channels (15–25 keV, 25–50 keV, 50–100 keV, and 100–350 keV) are always available. For some bursts, TTE

– 18 –

data are available, enabling any desired energy and time binning.

BAT observed 44 KW short bursts outside its FoV. We derived KW -BAT annuli for 23 of them.

For cross-correlation we utilized KW light curves in the G2 or in the G2+G3 band with 2 or 16-ms resolution and BAT 64 ms light curves usually taken in the energy range above 50 keV (which often provides the best S/N and corresponds better to the KW energy band).

The resulting χ^2_{r,min} range from 0.25 to 7.48 with a mean of 1.41. The maximum χ^2_{r,min} of 7.48 (dof=6) is a clear outlier in the distribution of bursts over χ^2_{r,min}. It corresponds to the exceptionally intense GRB20060306 T55358 with strong spectral evolution and a peak count rate of 1.9 × 10^5 counts s^{−1} (KW 2-ms time scale). The derived statistical uncertainty in the time delay is only 5 ms, so we added 10 ms systematic uncertainty.

The derived uncertainties in the time delays range from 5 ms to 64 ms with a mean of 22 ms, and a geometrical mean of 18 ms. The resulting annuli 3σ half-widths range from 0.^∘059 (3.5^′) to 1.^∘18 with a mean of 0.^∘41, and a geometrical mean of 0.^∘29.

4.2.7. KW-Coronas-F (Helicon) triangulations

The Helicon gamma-ray spectrometer was one of the instruments onboard the Coronas-F solar space observatory (Oraevskii et al. 2002). It was similar to the KW spectrometer in the characteristics of its two detectors and in the data presentation structure. The similar design of both instruments enabled good cross-correlations of burst light curves.

Helicon observed 14 KW short GRBs. We derived KW -Helicon annuli for all of them. The resulting χ^2_{r,min} range from 0.25 to 2.67 with a mean of 1.02. The derived uncertainties in the time delays range from 4 ms to 80 ms with a mean of 25 ms, and a geometrical mean of 17 ms. The resulting annuli 3σ half-widths range from 0.^∘045 (2.7^′) to 1.^∘15 with a mean of 0.^∘38, and a geometrical mean of 0.^∘25.

– 19 –

4.2.8. KW-Cosmos (Konus-A,A2,A3) triangulations

Konus-A, Konus-A2, and Konus-A3 were gamma-ray spectrometers aboard the Cosmos spacecraft 2326, 2367, and 2421, respectively. A brief description of the Konus-A instrument is given in Aptekar et al. (1998). Konus-A2 and Konus-A3 were similar to Konus-A in the characteristics of its detectors and in the data presentation structure.

They observed 5 KW short GRBs in the triggered mode. We derived KW -KA annuli for 4 of them.

The resulting χ^2_{r,min} range from 0.73 to 1.42 with a mean of 1.07. The derived uncertainties in the time delays range from 4 ms to 56 ms with a mean of 35 ms. The resulting annuli 3σ half-widths range from 0.^∘15 to 1.^∘20 with a mean of 0.^∘79.

4.2.9. KW-RHESSI triangulations

The Reuven Ramaty High-Energy Solar Spectroscopic Imager (RHESSI ) is a high resolution spectrometer designed to study high-energy emission from solar flares over a broad energy range from 3 keV to 17 MeV (Lin et al. 2002; Smith et al. 2002). The data are collected in the TTE mode enabling arbitrary energy and time binning.

RHESSI observed 58 KW short GRBs. We derived KW -RHESSI annuli for 32 bursts. For cross-correlation we utilized KW light curve in the G2, in the G1+G2, or in the G2+G3 band with 2, 16, 64, and 256-ms resolution (depending on burst intensity).

The resulting χ^2_{r,min} range from 0.36 to 2.62 with a mean of 1.07. The derived uncertainties in the time delays range from 2 ms to 184 ms with a mean of 36 ms, and a geometrical mean of 20 ms. The resulting annuli 3σ half-widths range from 0.^∘027 (1.6^′) to 2.^∘71 with a mean of 0.^∘53, and a geometrical mean of 0.^∘30.

– 20 –

4.2.10. KW-HETE-2 (FREGATE) triangulations

The gamma-ray detector of HETE-2, called FREGATE, was designed to detect gamma-ray bursts in the energy range 8-400 keV (Ricker et al. 2003; Atteia et al. 2003).

In the triggered mode it measures light curves with a time resolution of 1/32 s in the 8–400 keV range; in the real-time mode the time-resolution is 0.1638 s.

FREGATE observed 16 KW short GRBs: 8 in the triggered mode and 8 in the real-time mode. In most cases the FREGATE response is significantly weaker than the responses of other instruments flying on low-Earth s/c, so we used the FREGATE data only for a few cases when no other low-Earth s/c detected the burst. We derived KW-HETE annuli for 4 bursts observed in the triggered mode.

For cross-correlation we utilized KW light curve in the G2 or in the G2+G3 band with 2 or 16-ms resolution.

The resulting χ^2_{r,min} range from 0.50 to 1.43 with a mean of 0.96. The derived uncertainties in the time delays range from 56 ms to 168 ms with a mean of 102 ms. The resulting annuli 3σ half-widths range from 0.^∘95 to 1.^∘47 with a mean of 1.^∘10.

4.2.11. KW-AGILE (MCAL) triangulations

The mini-calorimeter (MCAL) aboard the AGILE mission is a spectrometer sensitive to gamma-rays in the energy band ≃0.35 – 100 MeV (Tavani et al. 2009). MCAL has the advantage of time-tagged data.

MCAL observed 24 KW short GRBs: 22 in the triggered mode and 2 in the real-time mode. In many cases the MCAL response is rather weak due to its high energy threshold and strong attenuation by the GRID instrument, so we used the MCAL data only for several intense bursts. In total we derived 9 KW -MCAL annuli.

– 21 –

For cross-correlation we utilized KW light curve in the G3 or in the G2+G3 band with 2 or 16-ms resolution.

The resulting χ^2_{r,min} range from 0.29 to 2.26 with a mean of 1.08. The derived uncertainties in the time delays range from 5 ms to 21 ms with a mean of 13 ms. The resulting annuli 3σ half-widths range from 0.^∘071 (4.3^′) to 0.^∘60 with a mean of 0.^∘21.

4.2.12. INTEGRAL – near-Earth s/c triangulations

Even without the planetary missions, the mini-network of low-Earth orbiters, plus INTEGRAL and Konus-Wind, often make it possible to obtain error boxes for many bursts. Since INTEGRAL orbits at distances ≲0.5 lt-s, which are much smaller than the Wind-to-Earth distance ≃5 lt-s, KW-INTEGRAL and KW -near-Earth s/c annuli intersect at grazing incidence, resulting in one or two long boxes. In some cases, the intersection of KW -near-Earth s/c and INTEGRAL-near-Earth s/c results in smaller localization regions.

In total 11 INTEGRAL-near-Earth s/c annuli have been obtained. The resulting annuli halfwidths range from 1.^∘0 to 14.^∘0 with a mean of 5.^∘9.

4.3. Verifying triangulation annuli

Of the 271 Konus short bursts localized by IPN, 17 were precisely localized by instruments with imaging capabilities: 15 by Swift-BAT (one of them, GRB 090510, was also localized by Fermi-LAT), 1 by HETE-2 (WXM and SXC), and 1 by INTEGRAL IBIS/ISGRI.

We utilized these bursts to verify our triangulations. For these 17 bursts, 21 KW -near-Earth s/c and 12 KW -INTEGRAL annuli were obtained (we have not used the light curves of the instruments which imaged the burst, since the instrument response for imaged bursts is different from those detected outside the FoV and used for IPN triangulations). In each case the triangulation annuli are in agreement with the known position of the source, thereby confirming the reliability

– 22 –

of our triangulations. Indeed, such tests constitute “end-to-end” calibrations, as they confirm not only spacecraft timing and ephemeris information, but also the cross-correlations of the various time histories and derivations of the annuli.

The histograms of Figure 7 show the distribution of relative source offsets from the center lines of the annuli. One can see that all offsets (in absolute values) are less than 2σ. The minimum offset of the precise position is -2.0σ, the maximum is 1.9σ, the average is 0.04σ, and the standard deviation is 1.1σ.

Besides this verification, the consistency of several KW -near-Earth s/c annuli often obtained for a given burst with each other and with distant s/c annuli (when available) confirms the reliability of our KW -near-Earth triangulations, many of which have time delay uncertainties less than 10–20 ms (see Figure 5).

5. LOCALIZATIONS: ADDITIONAL CONSTRAINS

In addition to triangulation annuli, several other types of localization information are included in this catalog. They are ecliptic latitude range, autonomous burst localizations obtained by CGRO BATSE, BeppoSAX GRBM, and Fermi GBM, and Earth- or Mars-blocking (MESSENGER is in an eccentric orbit around Mercury, so Mercury-blocking is quite rare). This additional information helps constrain the triangulation position, i.e., to choose one of two triangulation boxes, or to eliminate portions of a single annulus.

5.1. Ecliptic latitudes

The ecliptic latitudes of the bursts are derived by comparing the count rates of the two KW detectors taken in the waiting mode with 1.472 s or 2.944 s time resolution. The axis of the detector S2 points towards the north ecliptic pole, and the axis of S1 points toward the south ecliptic pole. In addition to statistical uncertainties, the ecliptic latitude determination is subject to systematic

– 23 –

uncertainties due to, among other things, time-variable cosmic X-ray sources and absorption by other instruments aboard the spin-stabilized Wind spacecraft. The estimated ecliptic latitudes can be taken to be at the 95% confidence level.

The ecliptic latitude range, namely the best estimate of b, and the lower and upper limits b_{min}, b_{max} can be considered to be an annulus centered at the north or south ecliptic pole, with a half-angle θ = 90^∘ − |b| and half-widths d_−(θ) = b_{min} − b, d_+(θ) = b_{max} − b.

5.2. Planet-blocking

Planet-blocking is specified by the right ascension and declination of the planet’s center and its radius. When a spacecraft in low Earth or Mars orbit observes a burst, the planet blocks up to ≈ 3.7 sr of the sky. The source position must be outside this occulted part of the sky.

The allowed part of the sky can be described as a degenerate annulus centered at the direction opposite to the planet’s center, with a half-angle θ = 0 whose widths d_−(θ) = 0, d_+(θ) = sin^{−1}(R_{planet}/R), where R is the radius of the s/c orbit (here we neglect the oblateness of the planet and absorption in its atmosphere).

5.3. Autonomous localizations

A principle of autonomous burst localization using a system of detectors posessing anisotropic angular sensitivity was suggested by Golenetskii et al. (1974) and first implemented in the KONUS instruments on the Venera 11 and 12 missions (Mazets & Golenetskii 1981).

Similar localization systems consisting of different numbers of detectors have been placed on CGRO (BATSE), BeppoSAX (GRBM), and Fermi (GBM). These autonomous localizations, derived by comparing the count rates of various detectors, are affected by Earth albedo and absorption by spacecraft materials, among other things, and their shapes are in general complex. The error circles are approximations to these shapes. They are centered at the point which is the most

– 24 –

likely arrival direction for the burst, and their radii are defined so that their areas are equal to the 1σ(BATSE, GBM) or 90% confidence (GRBM) statistical-only true error regions. All these localizations also have systematic errors of several degrees or more.

These error circles can also be described as degenerate annuli centered at the most likely arrival direction for the burst, with a half-angle θ = 0 whose widths d_−(θ) = 0, d_+(θ) = r, where r is the positional error.

6. LOCALIZATIONS: RESULTS

Table 2 summarizes localization information for 271 Konus short bursts. The first column gives the burst designation (see Table 1). The second column gives the number of localization constraints (the number of rows with localization information for the burst). The six subsequent columns give localizations expressed as a set of annuli: the third column gives the source of the location: either sc1–sc2 (triangulation annulus derived using sc1 and sc2), or ‘Ecl.Band’ (range of ecliptic latitudes), or ‘Instr’ (name of the instrument which autonomously localized the bursts), or ‘Occ.sc’ (planet-blocking); columns 4–8 list the right ascension and declination of the annulus center (J2000), the annulus radius θ, and the 3σ uncertainties in the radius d_−(θ), d_+(θ).

Planet-blocking is given only if it constrains the location. The ecliptic latitude range is given for all bursts. All available autonomous localizations are given.

The Swift-BAT localizations are taken from the second Swift BAT catalog covering 2004 December 19 to 2009 December 21 (Sakamoto et al. 2011), and for the latest bursts from the GCN Circulars with BAT refined positions.

The HETE-2 localizations for GRB 040924 (=GRB20040924 T42735) is taken from Arimoto et al. (2006).

The IBIS/ISGRI localization for GRB 070707 (=GRB20070707 T58122) is taken from Götz et al. (2007).

– 25 –

The BATSE localizations are taken from the current catalog on the BATSE website^2, as well as from the BATSE untriggered burst catalogs (Stern et al. 2001; Kommers et al. 2000)^3.

The BeppoSAX localizations are taken either from the GRBM catalog (Frontera et al. 2009) or from the IAU and GCN Circulars.

The GBM localizations are taken from the first Fermi GBM catalog covering 2008 July 12 to 2010 July 11 (Paciesas et al. 2012), the GCN Circulars, or from the latest version of the corresponding ‘glg tcat*.fit’ file in the GBM data archive^4.

6.1. Boxes

For those bursts which were detected by three or more well separated s/c, a triangulation box can be derived.

In general, the intersection of two annuli involving distant s/c gives a small box with an area as small as 1 arcmin^2.

The intersection of two annuli derived from a distant s/c, Konus-Wind, and a near-Earth s/c usually gives an elongated box, which nevertheless in most cases has a small area of several hundred arcmin^2. In some cases the intersection of annuli derived from a single distant s/c, Konus-Wind, and a near-Earth s/c can give a smaller error box than annuli derived using two distant s/c.

Long boxes were derived for bursts not observed by any distant s/c, but observed by KW, INTEGRAL SPI-ACS, and one or more near-Earth s/c. In such cases, the box is formed by a KW –near-Earth s/c annulus and an INTEGRAL–near-Earth s/c annulus, or by a KW –near-Earth

2http://www.batse.msfc.nasa.gov/batse/grb/catalog/current/ 3Since the catalog by Stern et al. (2001) contains the localizations for all 8 Konus short bursts detected by BATSE in the real-time mode, and the catalog by Kommers et al. (2000) misses some of them, the given localizations are solely from Stern et al. (2001).

4ftp://legacy.gsfc.nasa.gov/fermi/data/gbm/bursts

– 26 –

s/c annulus and a KW –INTEGRAL annulus intersecting at grazing incidence.

In all cases, if the three s/c which formed the box were nearly aligned, the annuli intersect at grazing incidence, resulting in a long box.

In total we derived 162 error boxes for Konus short bursts: 27 for bursts observed by two distant s/c, 84 for bursts observed by one distant s/c and at least one near-Earth s/c, and 51 for bursts observed by only KW, INTEGRAL, and one or more near-Earth s/c. In some cases these error regions are actually long arcs rather than boxes (in particular this is a case when the burst was not observed by a distant s/c), but for simplicity we still refer to them as boxes since they are formed by intersection of two or more triangulation annuli.

6.2. Segments

For those bursts which were detected only by KW and another s/c, or by KW and one or more near-Earth s/c, the resulting localization is formed by a triangulation annulus (the narrowest in the case of several KW -near-Earth s/c annuli) and additional constraints. These localizations consist of the entire annulus (in the case where it is entirely inside the allowed ecliptic latitude band and there are no other constraints) or one or two annulus segments, formed by the intersection of the annulus with the ecliptic latitude band, and/or by exclusion of the occulted part of the annulus, or by combination with the BATSE localization (see section 4.2.1).

114 bursts had this kind of localization: 20 were bursts observed by KW and a distant s/c (of these, 3 were also observed by a near-Earth s/c in real-time mode, but KW -near-Earth s/c annuli have not been derived for them), and 94 were bursts observed by only KW and one or more near-Earth s/c.

– 27 –

6.3. Resulting error regions

Table 3 gives the description of the final IPN error regions for 254 Konus short bursts (this sample does not include the 17 imaged bursts). The nine columns contain the following information: (1) the burst designation (see Table 1), (2) the number of error regions for the burst, N_r: 1 or 2, (3) the number of corners of the region, N_c, (4) the region type: ‘B’ (box), ‘LB’ (long box: box with maximum dimension > 10^∘), ‘S’ (segment), or ‘A’ (annulus), (5) the area (for two regions the sum of their areas), (6) the maximum dimension of the region (that is the maximum angular distance between two points at the region boundary; for segments larger than half an annulus, this is just the outer diameter of the annulus), (7) the right ascension of the center of the error region, in the first row, and the right ascensions of the corners in the following N_c rows, and (8) the declination of the center of the error region, in the first row, and the declinations of the corners in the following N_c rows (if there are two error regions, additional N_c+1 rows are given: the center of the second region and its corners, so the total number of rows for such a burst is 2(N_c+1)). All coordinates are J2000.

In general, a simple, four-corner error region description is inaccurate and the curvature of the annuli should be taken into account. Only in cases where the maximum dimension of the error region is less than several degrees, can the box be reasonably well represented by its four corners. In other cases, especially when the region is a long arc or annulus segment, the given corners and center are intended to roughly indicate the position of the region on the sky. Figures showing the IPN localization (all derived annuli and the resulting error region(s)) can be found at the Ioffe Web site^5.

A histogram of IPN error region areas is shown in Figure 8. For bursts observed by distant s/c the areas range from 2.40×10^{−4} sq. deg (0.86 arcmin^2) to 142.1 sq. deg with a mean of 3.49 sq. deg, and a geometrical mean of 0.141 sq. deg. For bursts without distant s/c detections the areas range from 0.210 sq. deg to 4420 sq. deg with a mean of 242 sq. deg, and a geometrical mean of

5http://www.ioffe.ru/LEA/ShortGRBs_IPN/

– 28 –

46.2 sq. deg.

7. COMMENTS ON SPECIFIC EVENTS

GRB 051103 (=GRB20051103 T33943) may in fact be a giant SGR flare in the nearby M81 group of interacting galaxies as was suggested by Frederiks et al. (2007). The final IPN localization of this event along with further exploration of this possibility are given in Hurley et al. (2010b). See also Ofek et al. (2006) for implications of the optical and radio followup observations and Abadie et al. (2012) for implications of the gravitational-wave non-detection of this event.

GRB 070201 (=GRB20070201 T55390) is likely a giant SGR flare from the Andromeda galaxy (Mazets et al. 2008). See also Abbott et al. (2008) for implications of the gravitational-wave nondetection of this event, and Ofek et al. (2008) for implications of the optical afterglow and X-ray periodic source non-detections.

GRB 000420 (=GRB20000420 T42271): based on the KW-NEAR annulus it was suggested by Ofek (2007) that this burst might be associated with the nearby Sc-type galaxy M74 (NGC 628). The position of this galaxy lies well outside the wide KW-SAX annulus, thereby excluding it as a possible host for this short GRB – see Figure 9.

GRB 990405 (=GRB19990405 T30059): initially this event was classified as a burst from SGR 1900+14 since the narrow SAX-Ulysses annulus (3σ half-width of 0.^∘035) passes through the position of this SGR. The derived wide KW-SAX annulus (3σ half-width of 6.^∘4) is also consistent with the SGR position. But this burst is substantially harder even than two unusually hard bursts from SGR 1900+14: 981022, 991001 (Woods et al. 1999), making the possible association of this burst with the SGR doubtful.

– 29 –

8. SUMMARY AND CONCLUSION

This paper continues a series of catalogs of gamma-ray burst localizations obtained by arrivaltime analysis, or “triangulation” between the spacecraft in the 3rd interplanetary network, as summarized in Table 4.

We have presented the most comprehensive IPN localization data on 271 Konus-Wind short bursts. For 254 bursts IPN error regions were obtained and for 17 bursts precisely localized by instruments with imaging capability IPN triangulation annuli were derived for calibration purposes.

In total we derived 517 triangulation annuli, including 150 annuli with distant s/c. It was shown that for many shorts bursts KW –near-Earth s/c (or INTEGRAL) triangulation yields a rather narrow annulus (with half-width sometimes comparable to or even better than the annuli using distant s/c data), thereby providing small error boxes with areas of several hundred arcmin^2 even for those KW short bursts which were detected by only one distant s/c (and one or more near-Earth s/c), and providing a long box in cases where the burst was detected by Konus- Wind, INTEGRAL SPI-ACS, and one or more near-Earth s/c.

The localizations can be used for a wide variety of purposes, including, but not limited to, searches for a) gravitational wave and neutrino signals from merging compact objects b) very high energy photons from the burst sources c) giant SGR flares in nearby galaxies.

The Konus-Wind experiment is supported by a Russian Space Agency contract and RFBR grants 12-02-00032a and 13-02-12017-ofi-m. K.H. is grateful for IPN support under the following NASA, JPL, and MIT grants and contracts. JPL 958056 and 1268385 (Ulysses); NNX07AH52G and NNX12AE41G (ADA and ADAP); NAG5-12614, NNG04GM50G, NNG06GE69G, NNX07AQ22G, NNX08AC90G, NNX08AX95G and NNX09AR28G (INTEGRAL); NNG05GTF72G, NNG06GI89G, NNX07AJ65G, NNX08AN23G, NNX09AO97G, NNX10AI23G, and NNX12AD68G (Swift); NAG5- 3500 and NAG5-9503 (NEAR); MIT-SC-R-293291 and NAG5-11451 (HETE-II); JPL 1282043 (Odyssey); NNX06AI36G, NNX08AB84G, NNX08AZ85G, NNX09AV61G, NNX10AR12G (Suzaku);

– 30 – NNX09AU03G, NNX10AU34G, and NNX11AP96G (Fermi); NNX07AR71G (MESSENGER); NAG5- 7766, NAG5-9126, and NAG5-10710 (BeppoSAX).

REFERENCES Abadie, J., Abbott, B. P., Abbott, T. D., et al. 2012, ApJ 755, 2 Abbott, B., Abbott, R., Adhikari, R., et al., 2008, ApJ 681, 1419 Arimoto, M., Ricker, G., Atteia, J-L., et al. 2006, GCN Circ. 4550 Aptekar, R., Frederiks, D., Golenetskii, S., et al. 1995, Space Sci. Rev. 71, 265 Aptekar, R. L., Butterworth, P. S., Cline, T. L., et al. 1998, ApJ 493, 404 Atteia, J.-L., Boer, M., Cotin, F., et al., 2003, in Gamma-Ray Burst and Afterglow Astronomy 2001, A Workshop Celebrating the First Year of the HETE Mission, Eds. G. Ricker and R. Vanderspek, AIP Conf. Proc. 662 (AIP: New York), 17 Barthelmy, S. D., Barbier, L. M., Cummings, J. R., et al. 2005, Space Sci. Rev. 120, 143 Boynton, W. V., Feldman, W. C., Mitrofanov, I. G., et al. 2004, Space Sci. Rev. 110, 37 Briggs, M. S., Pendleton, G. N., Kippen, R. M., et al. 1999, ApJS 122, 503 Feroci, M., Frontera, F., Costa, E., et al., 1997, in EUV, X-Ray, and Gamma-Ray Instrumentation for Astronomy VIII, Eds. O. Siegmund and M. Gummin, SPIE 3114, 186 Frederiks, D. D., Palshin, V. D., Aptekar, R. L., et al. 2007, Astronomy Lettrs, 33, 19 Fishman, G., Meegan, C., Wilson, R., Paciesas, W., and Pendleton, G., 1992, in Proc. Compton Observatory Science Workshop, ed. C. Shrader, N. Gehrels, and B. Dennis (NASA CP 3137; Greenbelt, MD: GSFS), 26 Frontera, F., Costa, E., dal Fiume, D., et al. 1997, Astron. Astrophys. Suppl. Ser. 122, 357

– 31 – Frontera, F., Guidorzi, C., Montanari, E., et al. 2009, ApJS 180, 192 Gehrels, N., Chincarini, G., Giommi, P., et al. 2004, ApJ 611, 1005 Gold, R., Solomon, S., McNutt, R., et al. 2001, Planet. Space Sci., 49, 1467 Golenetskii, S. V., Il’Inskii, V. N., & Mazets, E. P. 1974, Cosmic Research, 12, 706 Goldsten, J. O., Rhodes, E. A., Boynton, W. V., et al. 2007, Space Sci. Rev. 131, 339 Götz, D., Beckmann, V., Mereghetti, S., & Paizis, A. 2007, GCN Circ. 6608 Hurley, K., Sommer, M., Atteia, J.-L., et al. 1992, Astron. Astrophys. Suppl. Ser. 92(2), 401 Hurley, K., Briggs, M., Kippen, R. M., et al. 1999a, ApJS 120, 399 Hurley, K., Briggs, M., Kippen, R. M., et al. 1999b, ApJS 122, 497 Hurley, K., Laros, J., Brandt, S., et al. 2000a, ApJ 533, 884 Hurley, K., Lund, N., Brandt, S., et al. 2000c, ApJS 128, 549 Hurley, K., Stern, B., Kommers, J., et al. 2005, ApJS 156, 217 Hurley, K., Mitrofanov, I., Kozyrev, A., et al. 2006, ApJS 164, 124 Hurley, K., Guidorzi, C., Frontera, F., et al. 2010, ApJS 191, 179 Hurley, K., Rowlinson, A., Bellm, E., et al. 2010, MNRAS 403, 342 Hurley, K., Briggs, M., Kippen, R. M., et al. 2011, ApJS 196, 1 Hurley, K., Atteia, J.-L., Barraud, C., et al. 2011, ApJS 197, 34 Hurley, K., Pal’shin, V., Aptekar, R., et al. 2013, ApJS, 207, 39 von Kienlin, A., Beckmann, V., Rau, A., et al. 2003, A&A, 411, L299 Kommers, J., Lewin, W., Kouveliotou, C., van Paradijs, J., Pendleton, G., Meegan, C., and Fishman, G., 2000, ApJ 533, 696

– 32 – Laros, J., Boynton, W., Hurley, K., et al. 1997, ApJS 110, 157 Laros, J., Hurley, K., Fenimore, E., et al. 1998, ApJS 118, 391 Lichti, G. G., Georgii, R., von Kienlin, A., et al. 2000, in The Fifth Compton Symposium, Eds.

Mark L. McConnell & James M. Ryan, AIP Conf. Proc. 510 (AIP: New York), p. 722 Lin, R. P., Dennis, B. R., Hurford, G. J., et al. 2002, Sol. Phys., 210, 3 Marar, T. M. K., Sharma, M. R., Seetha, S., et al., 1994, A&A 283, 698 Mazets, E. P., & Golenetskii, S. V., 1981, Astrophys. Space Sci. 75, 47 Mazets, E. P., Aptekar, R. L., Cline, T. L., et al., 2008, ApJ 680, 545 Meegan, C., Lichti, G., Bhat, P. N., et al., 2009, ApJ 702, 791 Norris, J. P., Scargle, J. D., & Bonnell, J. T. 2001, in Gamma-Ray Bursts in the Afterglow Era, ed. E. Costa, F. Frontera, & J. Hjorth (Berlin: Springer), 40 Ofek, E. O., Kulkarni, S. R., Nakar, E., et al. 2006, ApJ 652, 507 Ofek, E. O. 2007, ApJ 659, 339 Ofek, E. O., Muno, M., Quimby, R., et al., 2008, ApJ 681, 1464 Oraevskii, V. N., Sobelman, I. I., Zhitnik, I. A., & Kuznetsov, V. D., 2002, Phys. Usp. 45, 886 Paciesas, W. S., Meegan, C., von Kienlin, A., et al. 2012, ApJS, 199, 18 Rau, A., von Kienlin, A., Lichti, G., Hurley, K., & Beck, M. 2004, GCN Circ. 2568 Rau, A., von Kienlin, A., Hurley, K., and Lichti, G. 2005, A&A 438, 1175 Ricker, G. R., Atteia, J.-L., Crew, G. B., et al., 2003, in Gamma-Ray Burst and Afterglow Astronomy 2001, A Workshop Celebrating the First Year of the HETE Mission, Eds. G. Ricker and R. Vanderspek, AIP Conf. Proc. 662 (AIP: New York), 3, 2003

– 33 – Sakamoto, T., Barthelmy, S. D., Baumgartner, W. H., et al., 2011, ApJS 195, 2 Saunders, R. S., Arvidson, R. E., Badhwar, G. D, et al., 2004, Space Sci. Rev. 110, 1 Smith, D. M., Lin, R., Turin, P., et al. 2002, Sol. Phys. 210, 33 Solomon, S. C., McNutt, R. L., Gold, R. E., & Domingue, D. L. 2007, Space Sci. Rev. 131, 3 Stern, B., Tikhomirova, Y., Kompaneets, D., Svensson, R., and Poutanen, J., 2001, ApJ 563, 80 Tavani, M., Barbiellini, G., Argan, A., et al., 2009, A&A 502, 995 Takahashi, T., Abe, K., Endo, M., et al., 2007, PASJ 59, S35 Terrell, J., Lee, P., Klebesadel, R., & Griffee, 1996, in 3rd Huntsville Symposium, AIP Conf. Proc.

384 (AIP: New York), Eds. C. Kouveliotou, M. Briggs, and G. Fishman, 545 Terrell, J., Lee, P., Klebesadel, R., & Griffee, J., 1998, in Gamma-Ray Bursts, 4th Huntsville Symposium, Eds. C. Meegan, R. Preece, and T. Koshut, AIP Conf. Proc. 428, AIP Press (New York), p. 54 Terrell, J., & Klebesadel, R., 2004 , in Gamma-Ray Bursts: 30 Years of Discovery, Eds. E. Fenimore and M. Galassi, AIP Conf. Proc. 727 (AIP: New York), p. 541 Trombka, J. I., Boynton, W. V., Brückner, J., et al., 1999, Nucl. Inst. And Methods in Physics Research A 422, 572 Yamaoka, K., Endo, A., Enoto, T., et al., 2009, PASJ 61, S35 Woods, P. M., Kouveliotou, C., van Paradijs, J., et al., 1999, ApJ, 527, L47 Zhang, B., Zhang, B.-B., Virgili, F., et al., 2009, ApJ 703, 1696 Zhang, X.-L., Rau, A., & von Kienlin, A. 2010, in proceeding of the 8th INTEGRAL Workshop The Restless Gamma-ray Universe, 2010 September 2730, Dublin, Ireland, PoS (INTEGRAL 2010)161

– 34 –

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 35 –

Table 1. IPN/Konus short gamma-ray bursts

Designation Date Konus-Wind Type Time delay^a Observed by^b N_{tot} N_{dist} Note trigger time (UT) (s)

GRB19950210 T08424 1995 Feb 10 02:20:24.148 I -2.602(-0.009,+0.007) Uly(T),GRO(#3410) 3 1 GRB19950211 T08697 1995 Feb 11 02:24:57.749 I 0.003(-0.009,+0.005) Uly(T),GRO(#3412),SRS(T) 4 1 GRB19950414 T40882 1995 Apr 14 11:21:22.798 I 0.350(-0.008,+0.006) Uly(R) 2 1 GRB19950419 T08628 1995 Apr 19 02:23:48.860 I 0.418(-0.030,+0.026) Uly(T) 2 1 GRB19950523 T31302 1995 May 23 08:41:42.284 I 0.436(-0.068,+0.040) Uly(T) 2 1

aPropagation time delay from Wind to the Earth center and its 3σ uncertainty. This delay should be added to the Konus-Wind trigger time to get the Earth-crossing time.

bAGI: Astro-rivelatore Gamma a Immagini LEggero (AGILE); GRO: Compton Gamma-Ray Observatory (CGRO); COM: COMPTEL on CGRO; DMS: Defense Meteorological Satellite Program; Fer: Fermi; Hel: Helicon-Coronas-F ; HET: HETE-2 ; INT: International Gamma-Ray Laboratory (INTEGRAL); KA1: Konus-A on Cosmos 2326 ; KA2: Konus-A2 on Cosmos 2367 ; KA3: Konus-A3 on Cosmos 2421 ; KRF: Konus-RF on Coronas- Photon; LAT: Fermi Large Area Telescope; MAXI: Monitor of All-sky X-ray Image; MES: Mercury Surface, Space Environment, Geochemistry, and Ranging mission (MESSENGER); MO: Mars Odyssey; NEA: Near Earth Asteroid Rendezvous mission (NEAR); RHE: Ramaty High Energy Solar Spectroscopic Imager (RHESSI); SAX: BeppoSAX ; SRS: Stretched Rohini Satellite Series (SROSS); Suz: Suzaku; Swi: Swift; TGR: Transient gammaray spectrometer (TGRS) on Wind; Uly: Ulysses; In parentheses the detection mode is given: T – trigger, R – rate increase; #n – trigger number (when available).

1Imaged by HETE-2 (WXM and SXC). 2Imaged by Swift-BAT.

3Imaged by INTEGRAL IBIS/ISGRI.

Note. — This table will be published in its entirety in the electronic edition of the Astrophysical Journal Supplement Series. A portion is shown here

– 36 –

for guidance regarding its form and content.

– 37 –

Table 2. IPN localization data

Designation N Location^a R.A.(J2000) Decl.(J2000) θ d_−(θ) d_+(θ) source (deg) (deg) (deg) (deg) (deg)

GRB19950210 T08424 4 Uly-GRO 155.4443 +25.7475 53.6317 -0.0078 +0.0078 KW-GRO 130.3580 +18.8483 52.3229 -0.1532 +0.1189 Ecl.Band 90.000 -66.561 43.3 -19.5 +46.0 BATSE 154.55 -27.48 0 0 1.15 GRB19950211 T08697 4 Uly-GRO 335.8036 -25.1240 85.8298 -0.0063 +0.0063 KW-GRO 311.5868 -18.2357 89.9796 -0.0678 +0.1221 Ecl.Band 270.000 66.561 65.5 -39.5 +22.6 BATSE 9.51 52.65 0 0 1.08

asc_1-sc_2 – IPN annulus obtained using sc_1 and sc_2 data; Ecl.Band – the ecliptic latitude band of the burst; sc – spacecraft/instrument which imaged or autonomously localized the burst; Occ.sc – the occulted part of the sky for sc. The s/c name abbreviations are given in Table 1. For autonomous localizations the instrument names are given (i.e., BATSE, GRBM, GBM). BATSEbg – localization from the BATSE untriggered burst catalog (Stern et al. 2001). BATSEshift – BATSE localization modified as described in Sec. 4.2.1.

Note. — This table will be published in its entirety in the electronic edition of the Astrophysical Journal Supplement Series. A portion is shown here for guidance regarding its form and content.

– 38 –

Table 3. IPN error regions

Designation N_r N_c Type^a Max. dim. Area Formed by^b R.A.(J2000)^c Decl.(J2000)^c (deg) (sq. deg) (deg) (deg)

GRB19950210 T08424 1 4 B 5.65E-001 8.39E-003 Uly-GRO,KW-GRO,Ecl.Band 154.6820 -27.8792 154.3544 -27.8662 154.9633 -27.8744 154.9330 -27.8897 154.3240 -27.8812 GRB19950211 T08697 1 4 B 5.13E-001 6.09E-003 Uly-GRO,KW-GRO,Ecl.Band 14.7526 +53.8367 14.5265 +53.9214 15.1974 +53.6449 15.1690 +53.6722 14.4975 +53.9485

aType of the error region: ‘B’ (box), ‘LB’ (long box: maximum dimension > 10^∘), ‘S’ (annulus segment), and ‘A’ (entire annulus). bThe localization data from Table 2 used to form the region(s).

cFor localizations which are an entire annulus, these fields are empty (and only one row for the burst is given). The parameters of the annuli can be found in Table 2.

Note. — This table will be published in its entirety in the electronic edition of the Astrophysical Journal Supplement Series. A portion is shown here for guidance regarding its form and content.

– 39 –

Table 4. Recent IPN catalogs of gamma-ray bursts

Years covered Number of GRBs Description

1990–1992 16 Ulysses, Pioneer Venus Orbiter, WATCH, SIGMA, PHEBUS GRBs^a 1990–1994 56 Granat-WATCH supplement^b 1991–1992 37 Pioneer Venus Orbiter, Compton Gamma-Ray Observatory, Ulysses GRBs^c 1991–1994 218 BATSE 3B supplement^d 1991–2000 211 BATSE untriggered burst supplement^e 1992–1993 9 Mars Observer GRBs^f 1994–1996 147 BATSE 4Br supplement^g 1994–2010 279 Konus short bursts^h 1996–2000 343 BATSE 5B supplement^i 1996–2002 475 BeppoSAX supplement^j 2000–2006 226 HETE-2 supplement^k 2008–2010 146 GBM supplement^l aHurley et al. (2000a) bHurley et al. (2000c) cLaros et al. (1998) dHurley et al. (1999a) eHurley et al. (2005) f Laros et al. (1997) gHurley et al. (1999b) hpresent catalog iHurley et al. (2011a) jHurley et al. (2010a) kHurley et al. (2011b) lHurley et al. (2013)

– 40 –

Fig. 1.— Left: Timelines of the IPN missions since the launch of Wind in 1994, November (instrument names are given in the parentheses). Right: Number of Konus short bursts observed by each mission (for Wind (Konus) – the number of bursts observed by at least one other IPN s/c is given).

– 41 –

Fig. 2.— Examples of cross-correlation curves χ^2_r (τ). Horizontal red lines denote 3σ levels. Vertical blue lines show the best cross-correlation time lag τ (dashed-dotted line) and its 3σ confidence interval (dashed lines). Top Left: GRB19971118 T29008. Cross-correlation of the KW 2 ms light curve with the BATSE 64 ms light curve; τ = 0.060(−0.034, +0.012) s (dof=2). Top Right: GRB20070321 T67937. Cross-correlation of the KW 2 ms light curve with the WAM 1/64 s light curve; τ = 0.075(−0.008, +0.016) s (dof=12). Bottom Left: GRB20090715 T62736. Cross-correlation of the KW 2 ms light curve with the SPI-ACS 50 ms light curve; τ = 0.120(−0.016, +0.052) s (dof=7). Bottom Right: GRB20100206 T48606. Cross-correlation of the GBM 1 ms light curve with the KW 16 ms light curve; τ = −0.033 ± 0.012 s (dof=9).

– 42 –

Fig. 3.— Distribution of 3σ half-widths (HWs) of the 150 triangulation annuli obtained using the distant s/c data. The smallest HW is 0.^∘0024 (0.14^′), the largest is 2.^∘21, the mean is 0.^∘099 (5.9^′), and the geometrical mean is 0.^∘028 (1.7^′).

– 43 –

Fig. 4.— Wind distance from Earth as a function of time. The maximum distance was ≃7 lt-s in January and May 2002, when it was in a Distant Prograde Orbit (DPO). Since 2004 Wind has been in a Lissajous orbit at the L_1 libration point of the Sun-Earth system at a distance of ≃5 lt-s.

– 44 –

Fig. 5.— Distributions of uncertainties in time delay d(δT ) ≡ (d_+(δT ) + |d_−(δT )|)/2 and 3σ halfwidths (HWs) of the 356 triangulation annuli obtained using the Konus-Wind and near-Earth (or INTEGRAL) s/c data. The smallest d(δT ) is 2 ms, the largest is 504 ms, the mean is 43 ms, and the geometrical mean is 23 ms. The smallest HW is 0.^∘027 (1.6^′), the largest is 32.^∘2, the mean is 1.^∘30, and the geometrical mean is 0.^∘43.

– 45 –

Fig. 6.— IPN/BATSE localization of GRB19960420 T16844 (BATSE #5439). The center of the BATSE error circle (R.A., Decl.(J2000), Err = 234.^∘25, -27.^∘23, 2.^∘37) lies 3.^∘38 from the center line of the 1.^∘67 wide KW -BATSE annulus. The resulting long box is shown by the solid black line and its center (that is, the nearest point to the BATSE center at the annulus center line) is indicated by the asterisk. The corners of the box are formed by the intersection of the circle centered at the asterisk with a radius of 8.^∘12, that is the sum of the 2σ BATSE error radius and 3.^∘38 systematics (dashed line), and the KW -BATSE annulus.

– 46 –

Fig. 7.— Distribution of the offsets of the accurate GRB positions from the center lines of the 33 KW -near-Earth (or INTEGRAL) s/c annuli.

– 47 –

Fig. 8.— Distributions of error region areas for 123 Konus short bursts observed by at least one distant s/c (red dashed line), 131 bursts not observed by any distant s/c (blue dashed line), and all 254 bursts (17 imaged bursts are not counted).

– 48 –

Fig. 9.— IPN localization of GRB 000420 (=GRB20000420 T42714). The 1.7^′ wide SAX-NEAR annulus passes through the nearby M74 galaxy, while the galaxy is well outside the wide 3σ KW- SAX annulus.