arXiv:1301.5872v1 [astro-ph.SR] 24 Jan 2013

Astronomy & Astrophysics manuscript no. RT˙Vir˙sent˙publisher © ESO 2014 April 7, 2014

The wind of the M-type AGB star RT Virginis probed by VLTI/MIDI^⋆

S. Sacuto^1, S. Ramstedt^{1,2}, S. Höfner^1, H. Olofsson^3, S. Bladh^1, K. Eriksson^1, B. Aringer^4, D. Klotz^4, and M. Maercker^2

1 Department of Physics & Astronomy, Division of Astronomy & Space Physics, Uppsala University, Box 516, 751 20 Uppsala, Sweden e-mail: stephane.sacuto@physics.uu.se 2 Argelander Institut fur Astronomie, Auf dem Hugel 71, DE-53121 Bonn, Germany 3 Onsala Space Observatory, Dept. of Radio and Space Science, Chalmers University of Technology, SE-43992 Onsala, Sweden 4 University of Vienna, Department of Astrophysics, Türkenschanzstraße 17, A-1180 Vienna, Austria

Received ; accepted

ABSTRACT

Aims. We study the circumstellar environment of the M-type AGB star RT Vir using mid-infrared high spatial resolution observations from the ESO-VLTI focal instrument MIDI. The aim of this study is to provide observational constraints on theoretical prediction that the winds of M-type AGB objects can be driven by photon scattering on iron-free silicate grains located in the close environment (about 2 to 3 stellar radii) of the star.

Methods. We interpreted spectro-interferometric data, first using wavelength-dependent geometric models. We then used a selfconsistent dynamic model atmosphere containing a time-dependent description of grain growth for pure forsterite dust particles to reproduce the photometric, spectrometric, and interferometric measurements of RT Vir. Since the hydrodynamic computation needs stellar parameters as input, a considerable effort was first made to determine these parameters.

Results. MIDI differential phases reveal the presence of an asymmetry in the stellar vicinity. Results from the geometrical modeling give us clues to the presence of aluminum and silicate dust in the close circumstellar environment (< 5 stellar radii). Comparison between spectro-interferometric data and a self-consistent dust-driven wind model reveals that silicate dust has to be present in the region between 2 to 3 stellar radii to reproduce the 59 and 63 m baseline visibility measurements around 9.8 μm. This gives additional observational evidence in favor of winds driven by photon scattering on iron-free silicate grains located in the close vicinity of an Mtype star. However, other sources of opacity are clearly missing to reproduce the 10-13 μm visibility measurements for all baselines. Conclusions. This study is a first attempt to understand the wind mechanism of M-type AGB stars by comparing photometric, spectrometric, and interferometric measurements with state-of-the-art, self-consistent dust-driven wind models. The agreement of the dynamic model atmosphere with interferometric measurements in the 8-10 μm spectral region gives additional observational evidence that the winds of M-type stars can be driven by photon scattering on iron-free silicate grains. Finally, a larger statistical study and progress in advanced self-consistent 3D modeling are still required to solve the remaining problems.

Key words. techniques: interferometric - techniques: high angular resolution - stars: AGB and post-AGB - stars: atmosphere - stars: circumstellar matter - stars: mass-loss

1. Introduction

The mass loss of AGB stars is commonly ascribed to a twostep process, where the pulsation of the star creates atmospheric shock waves that push the matter to conditions where both temperature and density allow the formation of dust grains. When the dust opacity is large enough, grains receive enough momentum through radiative pressure to be accelerated away from the star and to drag the gas along by collisions, causing a slow outflow.

Although this scenario has been successfully tested for Ctype AGB stars by comparing detailed models with observations (e.g. Winters et al. 2000; Gautschy-Loidl et al. 2004; Nowotny et al. 2010, 2011; Sacuto et al. 2011), some fundamental open questions remain for the case of M-type AGB stars. As shown by Woitke (2006), silicate grains have to be basically iron-free to form and survive in the close vicinity of the star, resulting in insufficient absorption cross sections in the near-IR to drive

⋆ Based on observations made with the Very Large Telescope Interferometer at Paranal Observatory under programs 083.D-0234 and 086.D-0737 (Open Time Observations).

an outflow. As a response to these findings, Höfner (2008) proposed an alternative solution, involving thermodynamic conditions where iron-free silicate grains are able to reach sizes in the range of 0.1-1.0 μm in the close circumstellar environment (2 to 3 stellar radii). State-of-the-art radiation-hydrodynamic models demonstrate that forsterite particles (Mg_2SiO_4) in this size range have high enough radiative scattering cross-sections to drive an outflow (Höfner, 2008) and that the resulting visual and near-IR colors agree with observations (Bladh et al., 2011, 2012b). Recently, aperture-masking polarimetric interferometry with the NAOS-CONICA VLT focal instrument at near-IR wavelengths has revealed the presence of scattered flux resulting from 0.3 μm sized silicate grains in the close environment (about 2 stellar radii) of three low mass-loss, M-type AGB stars (Norris et al., 2012), giving strong observational support to the theoretical prediction by Höfner (2008).

Because of the poor angular resolution of the IRAS, ISO, and SPITZER satellites (larger than 2^{′′}), the mid-infrared excess of AGB stars observed with these instruments is dominated by the thermal emission from the extended dusty circumstellar re-

Sacuto et al.: The wind of RT Virginis

gions (above 100 stellar radii) where iron-rich silicate dust particles (Mg-Fe-silicates in the form of olivine and pyroxene) are thermally stable (e.g. Woitke 2006). A clear way to disentangle iron-free and iron-rich silicate dust emission is to spatially resolve the innermost parts of the stellar envelope. High angular resolution observations in the mid-infrared are very attractive for this purpose, as they probe the close circumstellar region inside five stellar radii (e.g. Ohnaka 2004), where only iron-free silicate particles can form and resist evaporation due to radiative heating (Woitke, 2006). By modeling the 10 μm interferometric emission with self-consistent dynamic atmosphere and wind models, we test the theoretical predictions of Höfner (2008) and give additional observational constraints regarding winds driven by photon scattering on iron-free silicate grains.

RT Vir is an M-type (Sp.Type M8III), semi-regular variable star and one of the brightest water maser sources (e.g. Imai et al. 2003; Richards et al. 2011). The mass-loss rate of the star, found from water maser emission and CO line emission, is around 1 to 5×10^{−7} M_⊙ yr^{−1} (Bowers & Johnston, 1994; Olofsson et al., 2002; Imai et al., 2003). Measurement values of the gas velocity vary from 6.2 km s^{−1} (González Delgado et al., 2003) in the SiO emitting region (∼ 400 AU away from the star) to 7.8 km s^{−1} (Olofsson et al., 2002) in the outer CO emitting region. Gas velocities up to 11 km s^{−1} (Richards et al., 2011) have been measured in the water maser emitting region (∼ 5 to 25 AU away from the star). The mid-infrared excess observed between 9 μm and 13 μm in the ISO/SWS data (see Fig. 3) indicates that the star is surrounded by a dust shell. The pulsation period of the star has been estimated to 155 days by Kholopov et al. (1985) and reevaluated to 375 days by Imai et al. (1997) using the AAVSO visual lightcurve with magnitudes varying from V=7.7 to 9.7. The Hipparcos distance to the star is 135±15 pc. The period-luminosity relation of Whitelock et al. (2008) gives a distance of 226 pc, in very good agreement with the distance of 220 pc derived by Imai et al. (2003) using both the statistical parallax, and model-fitting methods for the maser kinematics. We assume in the following that the distance of 220 pc determined by Imai et al. (2003) is the most reliable, since the Hipparcos distance could suffer from a systematic bias due to photocenter displacement of the star (Chiavassa et al., 2011). The effective temperature of the star is estimated to 2900 K (see Sect. 4.2), while the stellar diameter has been evaluated to 12.4 mas in the K and K’ bands (Monnier et al., 2004; Mennesson et al., 2002) and to 16.2 mas in the L’ band (Chagnon et al., 2002; Mennesson et al., 2002). Assuming that the uniform disk (UD) diameter in the K band is a good approximation of the continuum photospheric diameter (Scholz & Takeda, 1987), and that the distance is 220 pc and the effective temperature is 2900 K, the luminosity of RT Vir is about 5500 L_⊙.

The MIDI mid-infrared spectro-interferometric observations of RT Vir are presented in Sect. 2. Section 3 gives a first morphological interpretation of the object, based on the N-band interferometric data. The determination of the most appropriate dynamic model atmosphere for RT Vir is described in Sect. 4. In Sect. 5, we aim at constraining the dust chemistry in the inner wind region of RT Vir, in order to test the theoretical predictions of Höfner (2008). In Sect. 6 an alternative geometry is explored. Finally, the conclusions and future perspectives are given in Sect. 7.

2. Spectro-interferometric observations

The Very Large Telescope Interferometer (VLTI) of ESO’s Paranal Observatory was used with MIDI, the mid-infrared (λ=8-13 μm) interferometric recombiner (Leinert et al., 2003). MIDI combines the light of two telescopes and provides singledish acquisition images, calibrated spectra, visibilities, and differential phases in the N-band atmospheric window. All the observations, with the exception of observation #7 (see Table 1) made in HIGH-SENS mode, were performed in the SCI-PHOT mode of MIDI, meaning that photometry and interferometry were recorded simultaneously. The GRISM mode was used, providing a spectral resolution of about 230.

The observations of RT Vir were conducted in 2009 and 2011 with the VLT auxiliary telescopes (ATs) G0-H0, D0-H0, A0-G1, and A0-K0. These configurations provide projected baselines ranging from 128 m down to 30 m, probing spatial scales slightly above the stellar photosphere (∼1.5 stellar radii) to regions located above the dust condensation zone (∼6.5 stellar radii).

2.1. MIDI visibilities and differential phases

The data reduction software package MIA+EWS^1 was used to calibrate the visibility data. We checked that the resulting calibrated visibilities differed less than 5% to 10% between the reductions performed with MIA and with EWS. Because EWS also provides differential phases, the result of EWS is presented in the remainder of the paper. Various instrumental and atmospheric effects can affect the fringe contrast of the science target. Calibrator stars with known characteristics and dimensions must be observed close in time and space from the science target to derive the response of the instrument, and properly calibrate the interferometric measurements (e.g. Cruzalebes et al. 2010). During the first period (P83), we obtained measurements of the calibrator HD120323 (F_{12 μm}=255.4 Jy and ⊘=9.16±0.07 mas)^2 before or after the measurements of RT Vir, while in the second observing period (P86), measurements of the same calibrator were obtained before and after RT Vir (see Table 1). The data quality has been checked using the MIA Graphical User Interface (e.g. Sacuto et al. 2011; Klotz et al. 2012a). Among the MIDI measurements, data set #4 shows very broad dispersed power spectral densities (PSD) and fringe histogram (FH), probably caused by the bad atmospheric conditions during the night (seeing>2^{′′}). If the PSD and FH are very broad, a very significant fraction of the fringe power is distributed outside the integration range, leading to a systematic underestimation of visibility (e.g. Sacuto et al. 2011). The corresponding visibility measurements were therefore discarded.

For P83, the calibrated visibilities from 2009 March 18 (data sets #1 and #2) were averaged over both bracketing calibrator observations obtained during that night, while error bars were derived from the standard deviation of the visibilities. This was not possible for the 2009 June 03 data (data set #3), since no other calibrators were observed in the same mode (GRISM+SCI-PHOT) during that night, and a standard multiplicative error of 10% was arbitrarily assumed for the visibilities (Chesneau, 2007). The calibrated visibilities from P86 were averaged over both bracketing calibrator observations obtained during each night, while error bars were derived from the

1 http://www.mpia-hd.mpg.de/MIDISOFT/, http://www.strw.leidenuniv.nl/∼nevec/MIDI/ 2 IRAS 12 μm flux and angular diameter from the ESO/MIDI calibrator database, respectively

Sacuto et al.: The wind of RT Virginis

Table 1. Journal of the MIDI Auxiliary Telescopes observations of RT Vir with its main calibrator.

# Star UT date & Time ϕ_V (Cycle) Config. Baseline length [m] PA [deg] Seeing [arcsec] 1 RT Vir 2009-03-18 05:03:28 0.15 (1) D0-H0 59 74 1.7 Cal HD120323 2009-03-18 05:23:40 . . . - . . . . . . 1.5 2 RT Vir 2009-03-18 06:03:49 0.15 (1) D0-H0 63 73 1.0 Cal HD120323 2009-03-18 06:26:04 . . . - . . . . . . 0.8 3 RT Vir 2009-06-03 01:33:04 0.35 (1) G0-H0 32 73 1.0 Cal HD120323 2009-06-03 02:00:57 . . . - . . . . . . 1.1 4^† RT Vir 2009-07-01 00:26:23 0.43 (1) A0-K0 126 72 2.4 Cal HD120323 2009-07-01 00:03:48 . . . - . . . . . . 2.0 5 RT Vir 2011-02-08 08:29:37 0.00 (3) A0-G1 89 113 0.9 Cal1 HD120323 2011-02-08 08:06:59 . . . - . . . . . . 0.9 Cal2 HD120323 2011-02-08 08:55:11 . . . - . . . . . . 1.0 6 RT Vir 2011-03-06 06:10:26 0.06 (3) G0-H0 30 74 1.2 Cal1 HD120323 2011-03-06 05:42:11 . . . - . . . . . . 1.2 Cal2 HD120323 2011-03-06 06:35:04 . . . - . . . . . . 1.2 7 RT Vir 2011-03-13 07:06:34 0.08 (3) A0-K0 128 73 1.4 Cal1 HD120323 2011-03-13 06:46:31 . . . - . . . . . . 1.3 Cal2 HD120323 2011-03-13 07:26:59 . . . - . . . . . . 1.2 Note 1: Calibrators used to calibrate the visibilities are given after the science target. The visual phase ϕ_V of the corresponding observing cycle is calculated from Eq. 1. The configuration, the length and position angle of the projected baseline, and the seeing value are also indicated. Note 2:^† means that the data were not exploitable (see text).

Fig. 1. Spectrally-dispersed MIDI calibrated visibilities of RT Vir observed over 5 nights between March 2009 and March 2011 (see Table 1) at baselines 30(green lines), 60(red lines), 90(blue line), and 130 m (purple line) from top to bottom, respectively.

standard deviation of the visibilities. Figure 1 shows the MIDIcalibrated visibilities of RT Vir observed over the five nights (see Table 1).

Error bars for the calibrated differential phases were derived in the same way as for the visibilities. Because the humidity and seeing levels were stable during 2009 June 03, a typical error of ±5^∘ was used for the data set #3 differential phases (Ohnaka et al., 2008). Figure 2 shows the MIDI calibrated differential phases of RT Vir observed over the five nights (see Table 1). It is clear from this figure that the 128 m baseline differential phases show a significant deviation from zero in the 8-9 μm band^3, greater than the expected upper-limit uncertainty of 10^∘.

3 Differential phase measurements for wavelengths longer than 12.0 μm are more uncertain owing to the increasing effect of the atmospheric water vapor and edge band noise. Therefore, the differential phases larger than the upper-limit uncertainty seen between 12.0 and 13.0 μm for data set #5 are probably not real.

Fig. 2. Spectrally-dispersed MIDI calibrated differential phases of RT Vir (similar color-code as in Fig. 1) observed over 5 nights between March 2009 and March 2011 (see Tab 1). The bold purple line represents the largest 128 m baseline measurements (data set #7).

A similar differential phase signature was found by Paladini et al. (2012) in the close environment of the C-type star R For.

2.2. MIDI and ISO/SWS spectra

MIDI spectra are derived from the average of the calibrated spectra close in visual phase within a given observing cycle, while the error bars are determined from the standard deviation of the calibrated spectra. Since the calibrated spectrum of data set #7 leads to an unusual spectral signature that is different from the other calibrated spectra, we decided to discard this measurement together with data set #4 (see Sect. 2.1).

In the following, the visual phase of the star is estimated from its AAVSO lightcurve (Henden, 2009) according to

ϕ_V =

(t − T_0) mod P P , (1)

Sacuto et al.: The wind of RT Virginis

Fig. 3. Comparison of the ISO/SWS spectrum of RT Vir (black thick line) and the MIDI calibrated spectra of RT Vir at phase ϕ_V=0.15 (Cycle 1) (blue solid line + error bars), phase ϕ_V=0.35 (Cycle 1) (red dasheddotted line), and at phase ϕ_V∼0.0 (Cycle 3) (green dashed line + error bars).

where t is the observing time in Julian date, T_0=2 454 854 is the Julian date of the selected phase-zero point corresponding to the maximum light of the star (ϕ^0_V=0.0), and P=375 days is the pulsation period of the star (Imai et al., 1997).

Figure 3 compares the calibrated MIDI spectra for both periods (2009/2011) with the ISO/SWS spectrum of RT Vir observed 1996 July 20. The ISO/SWS absolute flux level of RT Vir was scaled to the IRAS 12 and 25 μm photometry of the star. The MIDI flux level is ∼50% lower than that of ISO/SWS. Two possibilities could account for this difference. The first one is that the beam of an AT (∼1.1^{′′} at 10 μm) is small compared to that of the IRAS satellite^4. Because of the relatively short distance to RT Vir (220 pc), and the large extent of its dust envelope, some of the N-band flux might be lost outside the AT field-of-view. A second possibility that cannot be excluded is that the flux level has changed since the IRAS observation (performed in 1983), owing to cycle-to-cycle stellar variability. The AAVSO lightcurve shows an increase in the star visual amplitude by a factor of about 4 from the IRAS to the MIDI observations. Moreover, there is a ∼20% decrease in the MIDI flux from P83 (cycle 1) to P86 (cycle 3) (see Fig.3). Since the P83 and P86 periods are close in phase, this loss in brightness can be due to a cycle-to-cycle variability of the object.

3. Morphology of RT Vir in the mid-infrared

To constrain the morphology of the object, we used the software GEM-FIND (GEometrical Model Fitting for INterferometric Data; Klotz et al. 2012b). For the best reliability, the geometrical fitting requires the largest possible uv coverage (Klotz et al., 2012b). To check for interferometric variability of the source (which may compromise the use of the full data set for the fit), we can compare the visibility measurements of data sets #3 and #6. The two data sets have very similar baseline lengths and position angles, but were observed during two different cycles (see Table 1). The comparison between the two green upper curves

4 Keeping in mind that both 12 and 25 μm IRAS photometry were used to scale the ISO spectrum.

of Fig. 1 shows that no significant interferometric variability is found^5, unlike what is found for the MIDI N-band flux measurements (see Fig. 3), which are dominated by the emission from the extended circumstellar regions. The fact that no significant cycle-to-cycle variability is found for the 30 m MIDI visibilities, which probe the inner atmospheric regions, reveals different motions of the circumstellar environment from one spatial scale to the other.

To account for the central star, we used a spherical UD model. We used a spherical Gaussian distribution to reproduce the optically thin dusty envelope of the star. To account for the deviation from zero-differential phase in the 8-9 μm wavelength region of the 128 m baseline measurement (see Fig. 2), we added an offset Dirac delta distribution representing an unresolved component close to the star. The diameter of the UD representing the central star and the FWHM of the Gaussian distribution representing the dusty envelope are both wavelength dependent, in order to account for the opacity variation in the close stellar atmosphere and of the dust over the N-band range. Both the flux ratio of the envelope to the central star and the flux ratio of the unresolved component to the central star are also wavelength dependent, in order to account for the flux variation across the N-band for all three components.

The fitting strategy is the same as described in Klotz et al. (2012b). Figure 4 presents the best-fitting geometrical model together with the calibrated MIDI visibility and differential phase measurements of RT Vir. Figure 5 shows the normalized intensity distribution of the best model at 10.5 μm. Figure 6 gives the wavelength-dependent parameters of the best-fitting model.

All visibility and 30 to 89 m baseline differential phase measurements are very well reproduced by the model. The similar trend of the model and the 128 m baseline differential phases in the 8-9 μm range provides one simple solution to the nature of the asymmetry^6. It is assumed here that the asymmetry corresponds to an unresolved component having a flux of about 13 Jy from 8 to 8.5 μm (and about 2 Jy through the rest of the N-band), located at a projected distance of about nine stellar radii (12 AU away from the central star). However, the position of the unresolved component is not well constrained owing to the very limited uv-coverage. The result from the geometrical modeling shows that the unresolved component does not disrupt the sphericity of the close circumstellar environment (see Fig. 5), and could therefore be related to, e.g., an H_2O or SiO maser clump (i.e. Richards et al. 2011, 2012).

The overall larger stellar diameter (compared to the 12.4 mas K/K’-bands diameter) in the N-band (see in the upper left panel of Fig. 6) is probably caused by the presence of warm molecular layers of H_2O and SiO (e.g. Ohnaka et al. 2005). Furthermore, the increase in the stellar diameter from 16 mas (1.3 stellar radii) to 21 mas (1.7 stellar radii) between 10.3 and 12.5 μm is possibly correlated to the presence of Al_2O_3 (corundum), which is optically efficient around 11 μm (see Fig. 10), and has already been suggested to explain similar features seen in mid-infrared interferometric measurements of other comparable sources (e.g. Wittkowski et al. 2007; Zhao-Geisler et al. 2012).

5 With the exception of wavelengths longward of 12.3 μm that can be due to an underestimation of the uncertainties for data sets #3 and/or #6 because of edge band noise within this wavelength range or because of the small baseline length difference (2 m) between both data sets.

6 Keeping in mind that due to the lack of spatial coverage, more complex morphologies cannot be excluded.

Sacuto et al.: The wind of RT Virginis

Fig. 4. Best fit of the UD+Gauss+Dirac geometrical model (red solid lines) on the calibrated visibilities and differential phases of RT Vir (black solid lines).

The FWHM of the Gaussian distribution representing the dusty envelope increases from 16 mas (1.3 stellar radii) to 54 mas (4.3 stellar radii) between 8 and ∼9.4 μm. This increase is caused by a silicate dust opacity effect. The modeling also shows a large increase in the FWHM between 9.4 and 10.4 μm with a peak reaching 227 mas (18 stellar radii) around 9.8 μm. Such an increase is very likely related to an extended dusty circumstellar envelope composed of silicate grains. An extra shell of silicate dust also needs to be included in the dynamic modeling to explain the 30 and 32 m baseline visibility measurements (see Sect. 6). Finally, the FWHM shows a constant size of about 60 mas (5 stellar radii) between 10.4 and 12.5 μm.

This first morphological interpretation already gives us some clues to the presence of aluminum and silicate dust in the close environment (1.3 to 4.3 stellar radii) of RT Vir. Detailed theoretical modeling (Woitke, 2006) suggests that silicate grains forming on such spatial scales have to be iron-free not to evaporate from heating by the radiation field.

The MIDI differential phases show the presence of an asymmetry in the stellar vicinity. However, since the asymmetry does not affect the overall sphericity of the close circumstellar environment, this allows the use of the spherically symmetric dynamical model to investigate the presence of aluminum and ironfree silicate dust.

4. The dynamic model atmosphere of RT Vir

The dynamic model atmospheres (called DMAs hereafter) used are described in detail in Höfner (2008). They contain a consistent time-dependent description of grain growth for pure forsterite grains, and are based on radiative transfer in 319 wavelength points, taking size-dependent dust grain opacity into account. Each dynamic model starts from a hydrostatic initial structure, and the effects of stellar pulsation are simulated by a

Fig. 5. Normalized intensity distribution of the best-fitting geometrical model at 10.5 μm. The offset white circle represents the unresolved component. North is up and east is left.

Fig. 6. Wavelength-dependent parameter values of the best-fitting geometrical model. The upper left panel shows the stellar diameter. The K-band diameter of the star is superimposed as a dashed line. The upper right panel represents the FWHM of the dusty envelope. The lower left panel represents the flux ratio of the dusty envelope over the central star, while the lower right panel shows the flux ratio of the unresolved component over the central star.

variable inner boundary just below the stellar photosphere (piston model). The dynamic code provides the temporally varying temperature and density distribution of the object. Based on the radial structure at given instances in time, atomic and molecular opacities are computed using the COMA code^7 (Aringer et al., 2009). COMA solves the ionization and chemical equilibrium equations at a given temperature and density combination for a set of atomic abundances assuming LTE. The calculated opacities are then introduced into a spherically symmetric radiative

7 This version of the COMA code does not take dust scattering into account.

Sacuto et al.: The wind of RT Virginis

transfer code to calculate the emergent intensity distribution at any desired spectral resolution. This intensity distribution is used to derive the synthetic spectrum and visibility profile, which are compared to the observational data of the star.

4.1. Strategy

The strategy of selecting the most appropriate DMA for RT Vir is similar to the one used by Sacuto et al. (2011) for R Scl.

1. Constrain the best set of stellar parameters, i.e. surface gravity, mass, effective temperature, and metallicity, which are used for the initial hydrostatic structure of the DMA. This is done by fitting hydrostatic MARCS models to the broadband photometric and ISO/SWS spectrometric measurements of the star.

2. Constrain the additional input parameters of the DMA, i.e., the amplitude of the piston and abundance of seed particles. This is done in two steps:

a. Compute a sample of DMAs using the best-fit stellar parameters derived from the hydrostatic modeling. Different velocity amplitudes of the piston and abundances of seed particles are used to produce models with different mass-loss rates and wind velocities. Models producing mass-loss rates and wind velocities in agreement with the values found for RT Vir in the literature are selected for further analysis.

b. Among the set of models selected in the previous step, constrain the best velocity amplitude of the piston and abundance of seed particles, by comparing the time-dependent synthetic dust-free spectra to the broadband photometric and ISO/SWS spectrometric measurements.

These points are detailed in Sects. 4.2, 4.3.1, and 4.3.2, respectively.

4.2. Determination of the stellar parameters of RT Vir

The stellar parameters are determined by comparing hydrostatic stellar atmosphere models to the spectrophotometric data. The hydrostatic model that provided the best fit to the broadband B, V (simbad database) and J, H, and K photometric data from Kerschbaum & Hron (1994) and the ISO/SWS spectra of the star up to 5 μm was chosen. This limit of 5 μm is fixed because the contributions from atmospheric molecular and dust emission become non-negligible at longer wavelengths for optically thin, warm, dusty objects like RT Vir (Kraemer et al., 2002), and that cannot be accounted for by the hydrostatic modeling.

A least-squares minimization fitting was done using a grid of MARCS models (Gustafsson et al., 2008), which has a basic sun-like chemical composition as listed by Grevesse et al. (2007). The effective temperature of the star was varied from 2800 to 3200 K (ΔT_{eff}=100 K) for metallicity values of -0.25, 0.0, and 0.25. The surface gravity log g=-0.5 of the model was fixed according to a stellar mass M=1 M_⊙, the distance d=220 pc deduced by Imai et al. (2003), and the angular diameter of the central star of 12.4 mas derived from K-band long-baseline interferometry by Monnier et al. (2004). Table 2 summarizes the stellar atmosphere characteristics of RT Vir that was adopted, as well as deduced, from the best-fitting hydrostatic model. Figure 7 presents the best-fitting MARCS model, together with the spectrophotometric data. A discrepancy between the model

Fig. 7. Best-fitting hydrostatic MARCS atmospheric spectrum (green solid line) and best-fitting dust-free spectrum of the DMA 1 (red solid line) at bolometric phase ϕ_{bol}=0.59, together with the broadband photometric data (black squares) and ISO/SWS spectrum (black solid line) of RT Vir. The insets present the flux deviation of the hydrostatic MARCS spectrum (green solid line) and the flux deviation of the dust-free spectrum of the DMA 1 (red solid line) from the ISO/SWS spectrum around 3 μm and 4.25 μm, respectively.

and the measurements is seen around 3 μm corresponding to the H_2O and OH absorption bands, as well as around 4.25 μm corresponding to the CO_2 absorption band. The photospheric part of these bands provided by the hydrostatic model may not be enough to explain the observed features that could originate in the extended atmospheric environment. Finally, the temperature of T_{eff}=2900 K leads to a luminosity of L=5500 L_⊙ for the star.

Table 2. Stellar atmospheric parameters of RT Vir fixed and deduced from fitting a hydrostatic model to the spectrophotometric measurements.

Method Parameter Value Stellar diameter: θ (mas) 12.4 Fixed Stellar mass: M (M_⊙) 1 Surface gravity: log g -0.5 Effective temperature: T_{eff} (K) 2900 Deduced from the fit Metallicity: Z (Z_⊙) 1

Now that the stellar parameters of RT Vir have been determined, they are used for the initial hydrostatic structure to compute the corresponding DMAs having mass-loss rates and wind velocities in agreement with the ones found in the literature.

4.3. Constraining the additional parameters for the DMA

4.3.1. Dynamic model atmosphere sample

In addition to the stellar parameters determined from the best fit of the hydrostatic model to the spectrophotometric measurements (see Sect. 4.2), the dynamical computation requires three other free parameters to be determined: (i) the abundance of seed particles per H atoms n_{gr}/n_H, (ii) the velocity amplitude of the piston Δu_p, and (iii) the period of the piston P_{mod}.

While the period of the piston is fixed to P_{mod}=375 days, i.e., the pulsation period of the star (Imai et al., 1997), different values of n_{gr}/n_H and Δu_p are used, resulting in the development

Sacuto et al.: The wind of RT Virginis

of a wind, characterized by a mass-loss rate Ṁ and a wind velocity u. The range of values for Δu_p and n_{gr}/n_H are constrained by the values of Ṁ and u derived from other studies: 1 to 5×10^{−7} M_⊙ yr^{−1} (Bowers & Johnston, 1994; Olofsson et al., 2002; Imai et al., 2003) and 6.2 to 11 km s^{−1} (Olofsson et al., 2002; González Delgado et al., 2003; Richards et al., 2011).

The parameters and resulting wind properties of the detailed DMAs are listed in Table 3.

Table 3. DMAs parameters and resulting wind properties.

DMA # n_{gr}/n_H Δu_p <Ṁ> <u> [km s^{−1}] [M_⊙ yr^{−1}] [km s^{−1}] 1 3×10^{−15} 3 1.9×10^{−7} 6.6 2 3×10^{−15} 3.5 6.7×10^{−7} 11.4 3 1×10^{−15} 4 7.7×10^{−7} 7.1 4 1×10^{−15} 5 1.4×10^{−6} 11.5 The fundamental stellar parameters of the DMAs presented here are the ones listed in Table 2.

1n_{gr}/n_H and Δu_p are inputs values of the model, while <Ṁ> and <u> are output values.

4.3.2. Constraining the DMA of RT Vir

To select the most appropriate DMA for RT Vir, among the ones given in Table 3, we compare the time-dependent spectra computed without dust opacities of each DMA 1/2/3/4 to the spectrophotometric data below 8 μm. This limit is fixed because of the ability of the dynamical models, in contrast to the hydrostatic model, to self-consistently develop extended atmospheric molecular structure of H_2O, SO_2, and SiO typically emitting between 5 and 8 μm. Beyond 8 μm, the dust emission is nonnegligible, so addition of dust opacities in the radiative transfer calculation is required (see Sect. 5).

We investigated 46 snapshots from each model presented in Table 3, equidistant in phase^8 and distributed over three consecutive pulsation cycles. The additional parameters, n_{gr}/n_H and Δu_p, were derived by fitting the average dust-free synthetic spectrum for each DMA (averaged over all phases and cycles) to the spectrophotometric data below 8 μm. Another test was done by finding the individual dust-free spectrum that presents the best agreement with the spectrophotometric data for a given bolometric phase. In both cases, DMA 1 gives the best agreement with the spectrophotometric data (see Fig. 7). Spectra of DMA 2/3/4 having a higher <Ṁ>, overestimate the flux compared to the spectrophotometric measurements. While the best-fitting DMA 1 can reproduce the 3 μm band, in contrast to the hydrostatic model, it is not able to reproduce the measurements around 4.25 μm (CO_2 absorption band), as is also the case for the hydrostatic modeling (see Sect. 4.2). Because the contribution of extended molecular layers is accounted for by the DMA, the reason for the 4.25 μm discrepancy can be a deviation from chemical equilibrium in the low density outermost atmosphere (400-1000K), where the CO_2 feature is formed. In contrast to the hydrostatic MARCS models, Fig. 7 shows that the best-fitting DMA 1 is able to reproduce the 6.5-8 μm excess of H_2O, SO_2, and SiO emission from the extended atmosphere.

8 The phase of the DMA corresponds to the bolometric phase ϕ_{bol} derived from its bolometric lightcurve (Nowotny et al., 2005b).

Fig. 8. Absorption Q_{abs} (red solid line) and scattering Q_{sca} (blue dashed line) efficiencies of Mg_2SiO_4 as functions of grain radius at λ=9.8 μm. Data for the refractive index are taken from Jäger et al. (2003). The efficiencies are calculated using the Mie theory for spherical particles (program BHMIE from Bohren & Huffman (1983) and modified by Draine, www.astro.princeton.edu/draine/scattering.html).

5. Dust chemistry in the inner wind region of RT Vir

A major point of this study is to test the theoretical predictions of Höfner (2008), i.e., that winds of M-type AGB stars can be driven by photon scattering on iron-free silicate dust formed around two to three stellar radii. To do so, we compare the Nband spectro-interferometric measurements with the forsterite dust-rich spectrum and visibility profiles of the selected DMA 1 (see Sect. 4.3.2).

The predicted mean grain size of DMA 1 is <a_{gr}>=0.3 μm. Since the scattering efficiency of forsterite grains with sizes below 1 μm is lower than the absorption efficiency in the midinfrared (see Fig. 8), this allows the use of COMA (with no scattering included) for the comparison between the DMA and the MIDI interferometric data.

5.1. Iron-free silicate grains as wind drivers

Using the temperature and density structures given by the dynamical calculation, the intensity distribution can be computed within the N-band wavelength range at the MIDI-GRISM spectral resolution (230) with the help of the radiative transfer code COMA for the 46 snapshots of DMA 1. Because the COMA code uses the same molecular and dust (forsterite) opacities, such as the ones included in the dynamical computation, the radiative transfer is done consistently. By Fourier transform of the intensity profiles for the different projected baselines of the observations (see Table 1), we can derive the corresponding dispersed visibility profiles and compare them to the MIDI measurements of the star, following the same approach as described in Sacuto et al. (2011). We then select the best-fitting bolometric phases of DMA 1 by least-squares minimization between the results of the model and the visibility measurements for periods 2009 (cycle 1) and 2011 (cycle 3).

Figure 9 shows the best-fitting synthetic visibility profiles with forsterite of DMA 1, together with the MIDI measurements. We show, for comparison, the visibility profiles computed without dust opacities for the same bolometric phases

Sacuto et al.: The wind of RT Virginis

Fig. 9. Best-fitting synthetic visibility profiles with forsterite of DMA 1 at phase ϕ_{bol}=0.60 and ϕ_{bol}=0.86 (red solid lines), together with the MIDI measurements of the star (black solid lines) for periods 2009 (cycle 1) and 2011 (cycle 3), respectively. Red bars, next to the legend, represent the average phase dispersion of the model. Red dotted lines represent the corresponding dust-free visibility profiles at the same bolometric phases. Unshaded areas represent the silicate dust’s main effective domain.

to demonstrate the impact of the silicate grains.

The unshaded areas of Fig. 9 correspond to the wavelength region where silicate species show strong spectral features (see Fig. 10). Figure 9 reveals that the fully self-consistent DMA 1, producing forsterite dust particles of sizes ∼0.3 μm, is in better agreement with the interferometric measurements than the dustfree model, especially for the 59 and 63 m baselines, taking the average phase dispersion of the model into account shown by the bar next to the legend of each plot.

This result provides evidence for the presence of silicate dust in the region around two to three stellar radii probed by the 60 m baseline (considering an angular diameter of the star of 12.4 mas). This gives observational support, in addition to what is provided by Norris et al. (2012), in favor of the theoretical predictions of Höfner (2008), i.e., that winds can be driven by photon scattering on iron-free silicate grains formed in the close vicinity of M-type AGB stars. A further test for the presence of silicate dust around two to three stellar radii is discussed in Sect. 5.3.

5.2. Exploring extra dust opacities

In the dynamical computation, the formation of only one type of dust, i.e. pure forsterite (Mg_2SiO_4), is considered. However, it is likely that other types of dust can contribute to the enhancement of the opacity in the mid-infrared region. Figure 9 reveals that the synthetic visibilities are above the measurements longward of 10 μm, indicating that material strongly emitting around 11 μm in the close stellar vicinity is

Fig. 10. Optical efficiency per grain radius Q_{abs}/a_{gr} as a function of wavelength in the mid-infrared region for a selection of dust species likely to exist in the circumstellar environments of M-type AGB stars. Refractive index data were taken from Begemann et al. (1997) (Al_2O_3), Zeidler et al. (2011) (TiO_2, MgAl_2O_4), Palik (1985) (SiO_2), Jäger et al. (2003) (MgSiO_3 and Mg_2SiO_4), and Dorschner et al. (1995) (MgFeSiO_4).

missing in the radiative transfer computation. Figure 10 shows the efficiency per grain radius as a function of wavelength for a selection of oxygen-bearing dust species. From this plot, the only dust component that is optically efficient around 11 μm is Al_2O_3 (corundum) dust. Therefore, to improve the modeling of the visibility measurements longward of 10 μm, we try to compensate for the lack of opacity of the model around 11 μm by adding alumina dust in the a-posteriori radiative transfer computation.

Additional dust species can be included a-posteriori in the COMA radiative transfer code, as was done by Sacuto et al. (2011) for SiC dust in the case of R Scl. The radiative transfer is done inconsistently in this case because for M-type AGB stars, the dynamical computation does not include other dust opacities than forsterite. However, because of the low abundance of Al, aluminum dust should not influence the process of wind driving in the dynamical computation (Bladh & Höfner, 2012a). Nevertheless, aluminum dust, like corundum, is likely to contribute to the opacity enhancement around 11 μm (see Fig. 10) leading to better agreement between the model and the midinfrared visibility measurements. Finally, interferometric measurements in the mid-infrared have already pointed to the presence of Al_2O_3 dust around two stellar radii in Mira and semiregular M-type AGB stars (e.g. Wittkowski et al. 2007; Zhao- Geisler et al. 2012). We therefore decided to add corundum in the a-posteriori COMA radiative transfer computation, using the small-particle limit approximation.

Refractive indices of corundum were adopted from Begemann et al. (1997), while the condensation temperature was fixed to T^{Al2O3}_{cond} =1400 K (see e.g. Gail 2010). Since aluminum dust is not included in the dynamical computation, we assumed that corundum follows the same temperature-density structure as the gas. The only free parameter left is the degree of condensation (η_{Al2O3} ) of Al condensing into corundum. We varied η_{Al2O3} from 10% to 100% (with Δη_{Al2 O3} =10%) to minimize the

Sacuto et al.: The wind of RT Virginis

difference between the model and the visibilities for all baselines. Even if the addition of Al_2O_3 dust increases the opacity and leads to a decrease in the visibility amplitude longward of 9 μm, 100% of Al condensing into corundum is not sufficient to reach the level of the visibility measurements. However, because the overall shape of the synthetic visibility profile is similar to the measurements longward of 9 μm, we decided to increase the ratio above 100% assuming the creation of more dust than available Al atomic material, i.e., exceeding the solar abundance of Al. Varying η_{Al2O3} from 200% to 1000% (with Δη_{Al2O3} =100%), we find the best agreement with the measurements for η_{Al2O3} =500%.

From the measurements, a clear decrease in the visibility profile is revealed above 12.5 μm. Going back to Fig. 10, both MgAl_2O_4 (spinel) and TiO_2 (titanium dioxide) show an increase in their optical efficiency longward of 12.5 μm. Since TiO_2 has a lower optical efficiency than MgAl_2O_4 in the 12-13 μm region (see Fig. 10), the contribution from the TiO_2 opacities will have a negligible impact in comparison to the MgAl_2O_4 opacities. Therefore, we decided to do the test by only adding spinel, in the same way as corundum, in the a-posteriori COMA radiative transfer computation, using the small-particle limit approximation. Refractive indices of spinel are adopted from Zeidler et al. (2011), while the condensation temperature is fixed to T^{MgAl2O4}

cond =1150 K (see e.g. Gail 2010). Since aluminum dust

is not included in the dynamical computation, we assume that spinel follows the same temperature-density structure as the gas. The degree of condensation (η_{MgAl2O4} ) is varied from 10% to 100% (with Δη_{MgAl2O4} =10%) to minimize the difference between the model and the visibilities for all baselines. We found the best agreement for a full condensation (η_{MgAl2O4} =100%) of Al condensing into spinel.

Figure 11 shows the comparison between the best-fitting synthetic visibility profiles with forsterite+aluminum of DMA 1 and the MIDI visibility measurements. Visibility measurements for baselines equal to and larger than 59 m are reproduced well throughout the whole N-band range.

Obviously, a degree of condensation above 100% (i.e. binding up more of an element in dust than what is available) for Al or other elements is not a realistic solution, no matter how good the fit of the synthetic visibilities is to the observed ones. It should therefore be remembered that what is actually constrained by the fit is the column density of dust material contributing opacity to the relevant wavelength region. The dust column density is an integral containing the product of gas density times the degree of condensation. One possible solution to the problem is that the gas density in the circumstellar envelope in the close vicinity of RT Vir is actually higher than in our model. This would bring down the degrees of condensation by the corresponding factor, while keeping the same dust column density, in order to fit the observations in the N band. Considering that the mass-loss rates taken from the literature (see Sect. 4.3.1) are uncertain by a factor of 3 or more, and are mean values spanning more than several hundred years of mass loss, while RT Vir shows clear cycle-to-cycle variability and long-term trends (see Sect. 2.2), the current gas densities in the inner envelope are not well constrained by these values.

While a higher gas density (corresponding to a higher massloss rate) may help solve problems in the dust-dominated spectral regions, it could, on the other hand, also affect the moleculedominated regions of the SED, in particular in the near-infrared. However, as illustrated by the current problems reproducing the

Fig. 11. Best-fitting synthetic visibility profiles with forsterite+aluminum of DMA 1 at phase ϕ_{bol}=0.60 and ϕ_{bol}=0.86 (red solid lines) together with the MIDI measurements of the star (black solid lines) for periods 2009 (cycle 1) and 2011 (cycle 3), respectively. Red bars, next to the legend, represent the average phase dispersion of the model. Red dotted lines represent the synthetic visibility profiles with aluminum dust only of DMA 1 at the same bolometric phases.

CO_2 feature (see Sect. 4.3.2), questions remain regarding the validity of chemical equilibrium in the gas phase (e.g. Cherchneff 2006) and other model assumptions which could affect the molecular spectra. Therefore a discussion of this problem is beyond the scope of the current paper.

5.3. Identification of silicate grains in the 2 to 3 stellar radii region

To confirm the presence of silicate dust in the two to three stellar radii region, the following test was performed. The COMA radiative transfer code was run only including aluminum dust (with no silicate dust included) for the 46 snapshots of DMA 1. Corundum and spinel dust grains were added in the same way as in the Sect. 5.2. Refractive indices of corundum and spinel were adopted from Begemann et al. (1997) and Zeidler et al. (2011), respectively, while the condensation temperature was fixed to T=1400K for corundum and T=1150K for spinel. The only free parameter left is the degree of condensation of Al condensing into corundum and spinel. For that we varied the degree of condensation from 100% to 1000% (with steps of 100%) to minimize the difference between the model and the visibilities for all baselines.

Figure 11 presents the best-fitting synthetic visibility profiles with aluminum dust only of the DMA 1 and the visibility measurements of RT Vir. We found the best agreement with the measurements for the same degree of condensation of Al (η_{Al2O3} =500% and η_{MgAl2O4} =100%) as the model that includes both forterite and aluminum dust (see Sect. 5.2).

Sacuto et al.: The wind of RT Virginis

Figure 11 shows a clear discrepancy (taking the average phase dispersion of the model into account) between the synthetic visibility profiles only with aluminum dust and the measurements around 9.8 μm for the two 59 and 63 m baselines measurements^9. This reveals a lack of opacity within the region around two to three stellar radii probed by these baselines at 9.8 μm. Among the data shown in Fig. 10, only the silicate species show strong spectral features around 9.8 μm. From Fig. 10, it is difficult to distinguish between iron-rich and ironfree silicate dust in this wavelength region. However, detailed theoretical modeling (Woitke, 2006) suggests that silicate grains forming within the region around two to three stellar radii have to be iron-free in order not to evaporate due to heating by the radiation field. Figure 11 shows that the model that includes both forsterite and aluminum dust (with the same degree of condensation of Al) can indeed reproduce the 9.8 μm visibility measurements for the two 59 and 63 m baselines, giving a clear confirmation for the presence of silicate in the two to three stellar radii spatial region.

The model including only aluminum dust (see Fig. 11) also reveals that silicate dust has a very slight impact on spatial scales around two stellar radii (probed by the 89 m baseline) and almost no influence on spatial scales around 1.5 stellar radii (probed by the 128 m baseline), taking the average phase dispersion of the model into account. This is reasonable assuming that the heating by the radiation field within this region certainly leads to the evaporation of silicate dust but not to the evaporation of aluminum dust.

This result not only confirms the presence of silicate dust in the region around two to three stellar radii, but also indicates that the column density of forsterite dust, provided by the DMA 1, is able to reproduce the spatial extent of the inner wind region within the 8-10 μm spectral range.

6. Exploring geometrical issues

Figure 11 reveals a lack of opacity of the model in comparison to the smallest 30 m baseline visibility measurements. Such an opacity enhancement was also found around 9.8 μm by the N-band geometrical modeling of RT Vir (see Sect. 3 and upperright plot of Fig. 6). One possibility for overcoming this discrepancy is to artificially add an extra shell of dust material.

6.1. Addition of an extra shell of forsterite

We decided to include an extra shell of forsterite dust, in addition to our previous forsterite plus aluminum model (see Sect.5.2), in order to reproduce the 30 m baseline visibility data. To do that, we varied the position of the inner edge of the shell between four and ten stellar radii, corresponding to the spatial region probed by the 30 m baseline. The abundance of forsterite is also varied under the assumption that 20, 40, 60, and 80% Si has condensed into forsterite. The best fit is obtained for the location of the extra shell around four to six stellar radii away depending on the phase. The best forsterite abundance ratio is found to be η_{Mg2SiO4} =60%, while the abundance of aluminum grains are found to be η_{Al2O3} =400% and η_{MgAl2O4} =80%, keeping the same condensation temperatures of 1400 K and 1150 K, respectively.

9 Increasing the degree of condensation of Al condensing into corundum further makes the visibility profile of the model too steep in comparison with the measurements in the 10-13 μm region without correcting the discrepancy around 9.8 μm.

Fig. 12. Best-fitting synthetic visibility profiles with forsterite+aluminum and extra shell of forsterite of DMA 1 at phase ϕ_{bol}=0.60 and ϕ_{bol}=0.86 (red solid lines), together with the MIDI measurements of the star (black solid lines) for periods 2009 (cycle 1) and 2011 (cycle 3), respectively. Red bars, next to the legend, represent the average phase dispersion of the model.

Results are shown in Figs. 12 and 13. Visibilities are now reproduced relatively well for all baselines, even if some discrepancies with the measurements still remain. The corresponding spectrum also shows a relatively good agreement with the measurements over the whole spectral range, especially revealing that the extra opacities added in the radiative transfer computation do not lead to any discrepancies in the near-infrared wavelength range.

Figure. 14 presents the corresponding intensity profiles at 10 μm, with forsterite plus aluminum dust and the extra shell of forsterite, of DMA 1 for phases ϕ_{bol}=0.60 and ϕ_{bol}=0.86. The extra shell is distinguishable from the horn-shaped profile around four stellar radii at phase ϕ_{bol}=0.60, and around six stellar radii at phase ϕ_{bol}=0.86. It is interesting to note that the position of the shell reproducing the cycle 1 interferometric measurements is around four stellar radii, while the position of the shell reproducing the cycle 3 interferometric measurements is around six stellar radii. This can be interpreted as shell having moved forward between the two cycles with a velocity of about 7.5 km s^{−1} (in good agreement with the time-average wind velocity of the best DMA 1, <u>=6.6 km s^{−1}).

6.2. Possible explanations of the results

Two scenarios, both related to the geometry of the circumstellar environment, can explain the need to add an extra dust shell to reproduce the interferometric measurements.

– Radial structure

Because of the variability of the object, radial structure changes with time. The visual magnitudes of the star reveal an amplitude increase in its lightcurve over time. Moreover,

Sacuto et al.: The wind of RT Virginis

Fig. 13. Best-fitting synthetic spectrum with forsterite+aluminum and extra shell of forsterite of DMA 1 dispersed in phases (red solid line + bars), together with the broadband photometric data (black squares), ISO spectrum (black solid line), and MIDI spectra of RT Vir at phase ϕ_V=0.15 (Cycle 1) (blue error bars) and phase ϕ_V∼0.0 (Cycle 3) (light green error bars). The best-fitting hydrostatic MARCS atmospheric spectrum (green solid line) is added too.

Fig. 14. Corresponding synthetic intensity profiles at 10 μm, with forsterite+aluminum and the extra shell of forsterite, of DMA 1 at phases ϕ_{bol}=0.60 (black solid line) and ϕ_{bol}=0.86 (red dashed line).

the comparison between the MIDI and ISO/SWS spectra shows a cycle-to-cycle variability (see Sect. 2.2). These changes can be related to a long-term variability of the star. Since we are only using a limited time-sequence of the DMA, we could be missing a period for which the density structure of the DMA gives better agreement with the interferometric measurements, without the need for extra silicate opacities.

– Deviation from spherical symmetry

Differential phase interferometric measurements reveal the presence of an asymmetry in the atmosphere of RT Vir (see Sect. 3). This is likely related to the presence of one or several clumpy structures in the close vicinity of the star, also suggested from water masers observations (Richards et al., 2011). Three-dimensional radiation hydrodynamics simulations of the convective interior and stellar atmosphere suggest there are non radial structures in the dust shells of

AGB stars (Freytag & Höfner, 2008) that might explain these clumpy structures and could potentially affect the dynamical process of wind formation.

7. Conclusion and perspectives

This work is a first attempt to understand the wind mechanism of M-type AGB objects by comparing photometric, spectrometric, and interferometric measurements with state-of-the-art, self-consistent, dust-driven wind models.

Comparison between spectro-interferometric data and a selfconsistent dust-driven wind model reveals that silicate dust has to be present in the region between two to three stellar radii to reproduce the 59 and 63 m baseline visibility measurements around 9.8 μm. Detailed theoretical modeling (Woitke, 2006) suggests that silicate grains forming on such spatial scales have to be iron-free in order not to evaporate owing to heating by the radiation field.

This result also indicates that the column density of forsterite dust, provided by the DMA, is able to reproduce the spatial extent of the inner wind region in the 8-10 μm spectral range. This gives observational evidence, in addition to what is provided by Norris et al. (2012), in favor of the theoretical predictions of Höfner (2008), i.e., that winds can be driven by photon scattering on iron-free silicate grains formed in the close vicinity of an M-type AGB star.

However, the synthetic visibilities resulting from the model are above the measurements longward of 10 μm, indicating that material strongly emitting around 11 μm in the close stellar vicinity is missing in the radiative transfer computation. Ad-hoc addition of corundum and spinel dust in the a-posteriori radiative transfer can compensate for the lack of opacity, giving better agreement between the model and the 10-13 μm interferometric measurements for baselines longer than 59 m.

The necessity to increase the degree of condensation of Al material to a value about five times higher than the solar abundance, in order to obtain a good fit to the MIDI measurements, may indicate that the circumstellar gas density in the close vicinity of RT Vir is actually higher than in our model. The mass-loss rates used to constrain the dynamic model atmosphere of RT Vir are uncertain by a factor of 3, or more, and are mean values spanning more than several hundred years (e.g. Ramstedt et al. 2008). Considering that RT Vir shows clear cycle-to-cycle variability and long-term trends, the current gas densities in the inner envelope are not well constrained by these average values. On the other hand, a higher gas density could also affect the moleculedominated regions of the SED, in particular in the near-infrared. However, as illustrated by the inability of the model to reproduce the CO_2 feature, questions remain regarding the validity of chemical equilibrium in the gas phase and other model assumptions that could affect the molecular spectra.

The need for an extra silicate dust shell to reach the right level of the 30 m baseline visibility measurements is still puzzling, but can be related to the geometry of the circumstellar environment in various ways. Among them, the long-term variability of the star and the presence of clumpy structures in the stellar vicinity are the most likely ones. To overcome these problems, a larger statistical study and progress in advanced self-consistent 3D modeling are required.

Acknowledgements. This work has been funded by the Swedish Research Council (Vetenskapsrådet). SR acknowledges support by the Deutsche

Sacuto et al.: The wind of RT Virginis

Forschungsgemeinschaft (DFG) through the Emmy Noether Research grant VL 61/3-1. DK acknowledges support from the Austrian Science Fund FWF under project number AP2300621. BA acknowledges support from Austrian Science Fund (FWF) Projects AP23006 & AP23586 and from contract ASI- INAF I/009/10/0. We would also like to thank the referee for valuable comments.

References

Aringer, B., Girardi, L., Nowotny, W., et al., 2009, A&A, 503, 913 Begemann, B., Dorschner, J., Henning, Th., et al., 1997, ApJ, 476, 199 Bladh, S., Höfner, S., Aringer, B., 2011, in Astronomical Society of the Pacific Conference Series, Vol. 445, Why Galaxies Care about AGB Stars II: Shining Examples and Common Inhabitants, ed. F. Kerschbaum, T. Lebzelter, & R. F.Wing, 315 Bladh, S., & Höfner, S., 2012, A&A, 546, 76 Bladh, S., Höfner, S., Nowotny, W., et al., 2012, A&A, in prep. Bohren, C.F., & Huffman, D., 1983, Absorption and scattering of light by small particles, (New York: Wiley, 1983) Bowers, P. F., & Johnston, K. J., 1994, ApJS, 92, 189 Chagnon, G., Mennesson, B., Perrin, G, et al., 2002, AJ, 124, 2821 Cherchneff, I., 2006, A&A, 456, 1001 Chesneau, O., 2007, New Astronomy Reviews, 51, 666 Chiavassa, A., Pasquato, E., Jorissen, A., 2011, A&A, 528, 120 Cruzalèbes, P., Jorissen, A., Sacuto, S., Bonneau, D., 2010, A&A, 515, 6 Dorschner, J., Begemann, B., Henning, T., Jaeger, C., & Mutschke, H. 1995, A&A, 300, 503 Freytag, B., & Höfner, S., 2008, A&A, 483, 571 Gail, H.-P. Formation and Evolution of Minerals in Accretion Disks and Stellar Outflows. In T. Henning, editor, Lecture Notes in Physics, Berlin Springer Verlag, volume 815 of Lecture Notes in Physics, Berlin Springer Verlag, pages 61141, 2010.

Gautschy-Loidl, R., Höfner, S., Jørgensen, U. G., Hron, J., 2004, A&A, 422, 289 González Delgado, D., Olofsson, H., Kerschbaum, F., et al., 2003, A&A, 411, 123 Grevesse, N., Asplund, M., & Sauval, A. J. 2007, Space Sci. Rev., 130, 105 Gustafsson, B., Edvardsson, B., Eriksson, K., 2008, A&A, 486, 951 Henden, A. A., 2009, Observations from the AAVSO International Database, private communication Höfner, S., 2008, A&A, 491, 1 Imai, H., Shibata, K. M., Sasao, T, et al., 1997, A&A, 319, 1 Imai, H., Shibata, K. M., Marvel, K. B., et al., 2003, ApJ, 590, 460 Jäger, C., Dorschner, J., Mutschke, H., Posch, Th., Henning, Th., 2003, A&A, 408, 193 Kholopov, P. N., Samus, N. N., Kazarovets, F. V., & Perova, N. B. 1985, General Catalogue of Variable Stars (4th ed.;Moscow: Nauka) Kerschbaum, F., & Hron, J., 1994, A&AS, 106, 397 Kraemer, K. E., Sloan, G. C., Price, S. D., Walker, H. J., 2002, ApJS, 140, 389 Klotz, D., Sacuto, S., Kerschbaum, F., et al., 2012a, A&A, 541, 164 Klotz, D., Sacuto, S., Paladini, C., et al., 2012b, SPIE conf. Amsterdam, Netherlands, arXiv:1207.2131 Leinert, C., Graser, U., Przygodda, F., et al., 2003, Ap&SS, 286, 73 Monnier, J. D., Millan-Gabet, R., Tuthill, P. G., et al., 2004, ApJ, 605, 436 Mennesson, B., Perrin, G., Chagnon, G., et al., 2002, ApJ, 579, 446 Norris, B. R. M., Tuthill, P. G., Ireland, Michael J., et al., 2012, Nature, 484, 220 Nowotny, W., Lebzelter, T., Hron, J., Höfner, S., 2005b, A&A, 437, 285 Nowotny, W., Höfner, S., & Aringer, B., 2010, A&A, 514, 35 Nowotny, W., Aringer, B., Höfner, S., Lederer, M. T., 2011, A&A, 529, 129 Ohnaka, K., 2004, A&A, 424, 1011 Ohnaka, K., Bergeat, J., Driebe, T., et al., 2005, A&A, 429, 1057 Ohnaka, K., Izumiura, H., Leinert, Ch., et al., 2008, A&A, 490, 173 Olofsson, H., Gonzlez Delgado, D., Kerschbaum, F., Schöier, F. L., 2002, A&A, 391, 1053 Paladini, C., Sacuto, S., Klotz, D., et al., 2012, A&A, 544, 5 Palik, E. D. 1985, Handbook of optical constants of solids, ed. Palik, E. D. Ramstedt, S., Schöier, F. L., Olofsson, H., Lundgren, A. A., 2008, A&A, 487, 645 Richards, A. M. S., Elitzur, M., Yates, J. A., 2011, A&A, 525, 56 Richards, A. M. S., Etoka, S., Gray, M. D., et al, 2012, A&A, in press Sacuto, S., Aringer, B., Hron, J., et al., 2011, A&A, 525, 42 Sandin, C., & Höfner, S., 2003, A&A, 404, 789 Sandin, C., & Höfner, S., 2004, A&A, 413, 789 Scholz, M., Takeda, Y., 1987, A&A, 186, 200 Sloan, G.C., Kraemer, K. E., Price, S.D., & Shipman, R. F., 2003, ApJS, 147, 379 Tielens, A.G.G.M., Waters, L.B.F.M., Molster, F.J., Justtanont, K., 1998, Ap&SS, 255, 415 Tipping, R.H., & Chackerian, C. Jr., 1981, J. Mol. Spectros., 88, 352

Whitelock, P. A., Feast, M. W., van Leeuwen, F., 2008, MNRAS, 386, 313 Winters, J. M., Le Bertre, T., Jeong, K. S., et al., 2000, A&A, 361, 641 Wittkowski, M., Boboltz, D.A., Ohnaka, K., Driebe, T., Scholz, M., 2007, A&A, 470, 191 Woitke, P., 2006, A&A, 460, 9 Zeidler, S., Posch, T., Mutschke, H., et al., 2011, A&A, 526, 68 Zhao-Geisler, R., Quirrenbach, A., Koehler, R., Lopez, B., 2012, A&A, 545, 56