arXiv:1303.0114v4 [astro-ph.HE] 16 Apr 2013

Astronomy & Astrophysics manuscript no. MCAL-grb-catalog © ESO 2013 April 17, 2013

AGILE Mini-Calorimeter gamma-ray burst catalog

M. Galli^1, M.Marisaldi^2, F.Fuschino^2, C.Labanti^2, A.Argan^4, G.Barbiellini^{8,13}, A.Bulgarelli^2, P.W.Cattaneo^7, S.Colafrancesco^{15,16} , E.Del Monte^3, M.Feroci^3, F. Gianotti^2, A. Giuliani^{12}, F. Longo^8, S.Mereghetti^{12}, A. Morselli^5, L.

Pacciani^3, A. Pellizzoni^6, C. Pittori^{15,9}, M. Rapisarda^{11} , A. Rappoldi^7, M.Tavani^{3,14}, M.Trifoglio^2, A.Trois^6, S. Vercellone^{10}, and F. Verrecchia^{15,9}

1 ENEA Bologna, via Martiri di Montesole 4, I-40129 Bologna, Italy

e-mail: marcello.galli@enea.it 2 INAF/IASF Bologna, via Gobetti 101, I-40129 Bologna, Italy 3 INAF/IAPS, via Fosso del Cavaliere 100, I-00133 Roma, Italy 4 INAF, viale del Parco Mellini 84, I-00136 Roma, Italy 5 INFN, Roma Tor Vergata, via della Ricerca Scientifica 1, I-00133 Roma, Italy 6 INAF, Osservatorio Astronomico di Cagliari, località Poggio dei Pini, strada 54, I-09012 Capoterra, Italy 7 INFN Pavia, via Bassi 6, I-27100 Pavia, Italy 8 INFN Trieste, Padriciano 99, I-34012 Trieste,Italy 9 ASI Science Data Center, via G. Galilei, I-00044 Frascati, Italy 10 INAF/IASF Palermo, Via Ugo La Malfa 153, I-90146 Palermo, Italy 11 ENEA Frascati, via Enrico Fermi 45, I-00044 Frascati, Italy 12 INAF/IASF Milano, via E. Bassini 15, I-20133 Milano, Italy 13 Dip. di Fisica, Università di Trieste, via Valerio 2, I-34127 Trieste, Italy 14 Dip. di Fisica, Università “Tor Vergata”, via della Ricerca Scientifica 1, I-00133 Roma, Italy 15 INAF, Osservatorio Astronomico di Roma, Via Frascati 33, I-00040 Monteporzio, Italy 16 School of Physics, University of the Witwatersrand, Private Bag 3, WITS-2050 Johannesburg, South Africa

Received 3 December 2012 / Accepted 19 February 2013

ABSTRACT

The Mini-Calorimeter of the AGILE satellite can observe the high-energy part of gamma-ray bursts with good timing capability. We present the data of the 85 hard gamma-ray bursts observed by the Mini-Calorimeter since the launch (April 2007) until October 2009. We report the timing data for 84 and spectral data for 21 bursts. The data table are available from the Strasbourg Astronomical Data Center (CDS)^⋆ and the detailed data from the ASI Science Data Center (ASDC)^{⋆⋆}.

Key words. gamma rays:observations – X-rays: bursts – Catalogs

1. Introduction

In recent years many instruments have been devoted to the study of the gamma-ray bursts (GRBs), which remain one of the most puzzling phenomena in the Universe.

The energy released from these events spans a wide spectral region, from radio to GeV, with great variations in temporal and spectral behavior (Mezaros 2006). In most cases, the emission peaks in the range 50–500 keV; for this reason most of the instruments dedicated to GRBs are optimized for detection in this energy range.

The Mini-Calorimeter (MCAL) (Labanti et al. 2009) onboard the AGILE satellite (Tavani et al. 2009) is an instrument able to detect gamma-rays from ∼350 keV to 100 MeV region with a time resolution better than 2 μs. The main task of MCAL is to support the AGILE silicon tracker (Prest et al. 2003 , Bulgarelli et al. 2010) in measuring the gamma-ray energy, but

⋆ Tables 1, 2, and 4 are available in electronic form via anonymous ftp to cdsarc.u-strasbg.fr (130.79.128.5) or via http://cdsweb.u-strasbg.fr/cgi-bin/qcat?J/A+A/ ⋆⋆ Web site: http://agile.asdc.asi.it/ it is also used as an independent transients monitor and to investigate the high-energy part of GRBs (Marisaldi et al. 2008).

Onboard the AGILE satellite the SuperAGILE (SA) instrument (Feroci et al. 2007) also acts as a GRB monitor. It is a coded mask telescope operating in the energy range 15–45 keV with an angular resolution of 6 arcmin. Because of the very different energy ranges and the larger MCAL field of view (FOV) only a small fraction of the GRBs are detected by both instruments. The GRB data collected by SA are not homogeneous with the MCAL sample and are not considered in this paper.

Here we present a homogeneous sample of GRB data collected by MCAL between February 2008 and October 2009. During this period AGILE was operating in pointing mode, therefore a unique incoming direction in the reference frame of the spacecraft can be associated to each GRB. Since October 2009, AGILE is operating in spinning mode, due to a reactionwheel failure, scanning a large fraction of the sky with a typical angular velocity of a few degrees per second. The GRB data collected in spinning mode need different analysis methods and will be the subject of a forthcoming study.

In Section 2 we briefly describe the MCAL instrument, in Section 3 we describe the data collection and processing, Section

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

4 deals with the temporal analysis of the GRBs, Section 5 deals with the spectral analysis, and Section 6 presents our conclusions.

2. Instrument

The Mini-Calorimeter of the AGILE Satellite has been fully described elsewhere (Labanti et al. 2009): it consists of an array of 30 CsI(Tl) bars, each one of size 15 × 23 × 375 mm^3, arranged in two layers with the bars aligned along orthogonal directions for a total thickness of 3 cm.

The scintillation light produced by the interacting gammarays is collected at each end of the bars by photo-diodes (PD); the attenuation of the light transmitted along the bar can be represented by an exponential decay; the decay coefficient has an average value of 0.028 cm^{−1} and has been measured for each bar before the final assembly of the instrument. The energy released in the bar and the event position along the bar are obtained according to the exponential decay law, as described in a previous paper (Labanti et al. 2009). Measurements have shown that this is a reasonable approximation and fails only for energy released at the very end of the bars, where geometrical effects dominate over attenuation.

A discriminator circuit with programmable threshold receives the sum of the electric signals from the PDs; when the sum is higher than the threshold, the PDs signals are sent to an ADC, time-tagged and stored in a circular buffer. Because of the light attenuation, this electric signal threshold does not correspond to a fixed energy threshold: the bars are more sensitive to low-energy events near the photo-diodes than at the center of the bars. The PDs are characterized by their gain (e^−/keV) and the zero-level signal (offset). These parameters have been measured for each PD before launch and are used to evaluate the photon energy (Labanti et al. 2009).

The MCAL instrument is situated below the silicon tracker, but its FOV is not limited to the FOV of the tracker and acts as an all-sky monitor. The effective area of the detector is between 200 and 500 cm^2, depending on photon energy and angle (Labanti et al. 2009).

A complex, fully programmable trigger logic for transient event detection is implemented on-board (Fuschino et al. 2008). This trigger logic is based on the counts given by a number of detector rate-meters (DR): four independent rate-meters are obtained by dividing each MCAL layer into two parts and summing the signals from the bars of each part. The DR counts are integrated over three energy ranges (< 1.4MeV, 1.4−3.0MeV, > 3.0MeV) and six time windows (1, 16, 64, 256, 1024 and 8192 ms). These integrated counts are compared to the integrated background signal with a background integration-time chosen among seven time intervals (8, 16, 32, 65, 131, 262 and 524 s) and delayed with respect to the DR integration times. For the 1-ms and 16-ms time windows, the MCAL is considered as a whole and not divided into four parts. An additional moving time window of 300 μs duration is implemented for the detection of very short transients.

A partial trigger signal is issued for each DR if the counts exceed a given threshold. The trigger logic compares all partial triggers; a GRB trigger signal is issued only if a proper combination of partial triggers is obtained, otherwise the event is rejected. Different combinations of DRs, thresholds, time windows, and background integration-times, can be chosen; moreover the trigger criterion can be either static or dynamic: in the static criterion the threshold is fixed, while in the dynamic criterion the threshold is proportional to the standard deviation of the background. The GRB end time is determined by the time at which all DRs decrease below given thresholds; static and dynamic criteria are also implemented for the GRB ending time choice (TSTOP time). The trigger logic has been tuned during the first months of the mission, to optimize sensitivity and telemetry load, and minimizing the rate of false-positive triggers. The configuration implemented onboard requires that at least two partial triggers on different DR are issued at the same time for time windows larger than 16 ms. For these time windows the dynamic criterion was set, requiring that a partial trigger is issued only when the count rate exceeds the measured background rate by at least five standard deviations. The requirement for two simultaneous partial triggers implies a rather uniform involvement of all detection planes and helps to reject local enhancements generated by, for example, noise increase. For time windows of 16 ms and shorter, the static trigger criterion was set, requiring at least seven, ten and ten counts in the 300 μs, 1 ms and 16 ms time windows, respectively.

When a GRB trigger is issued, data are transmitted to the ground station on a photon-by-photon basis. Together with the GRB data, many seconds of data before and after the GRB are sent to ensure a proper estimate of the background level.

Since the end of the commissioning phase, MCAL and SuperAGILE, are part of the third InterPlanetary Network (IPN)^1 (Hurley et al. 2004), devoted to the localizing of GRBs by means of triangulation among different spacecrafts.

3. Data processing and selection

AGILE is on a nearly equatorial low-Earth orbit with a period of about 90 minutes; the MCAL data are sent once per orbit by the spacecraft to the ASI ground station based in Malindi, Kenya, during the ground-station contact phase. The data are processed as soon as they are received. The relevant data processing steps are energy evaluation, data selection and photon list production.

- Gamma-ray energy release evaluation: The energy released in each bar is evaluated; most of the events deposit energy in a single bar. For multiple events, i.e., those involving more than one bar, we attribute to the event the sum of the energies released in all different bars.

- On-ground data selection: the data stream transmitted to the ground station for each GRB trigger is visually inspected, and spurious triggers due to known electronic noise issues are discarded. Data in which only very short timescale triggers (trigger on the 16-ms time window or less) are activated are also carefully inspected but, since they are mostly relevant for terrestrial gamma-ray flashes (TGF) science (Marisaldi et al. 2010), they are not included in the present work.

- Photon list production: for each accepted trigger a photon list is produced. The photon list contains the time of each detected photon, and the energy released in each bar. Many seconds of background data before and after the GRB data are included, as specified in the trigger logic configuration.

This catalog includes 76 GRBs triggered on the 64-ms timescale and longer, plus nine GRBs triggered on the 16-ms timescale. For the 64-ms sample 81% of the GRBs activate the lower energy triggers (E < 1.4MeV) and only 17% and 2% the upper energy ones; the triggers for the four time windows of 64, 256, 1024 and 8192 ms represent 12, 34, 29, and 25% of the total. Triggers on timescales up to 16 ms where included only if

1 IPN web page: http://www.ssl.berkeley.edu/ipn3/

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

Fig. 1. Sky distribution of MCAL GRBs in galactic coordinates. The Galactic Center is at the center of the figure.

the events were confirmed by at least another spacecraft belonging to the IPN. This latter criterion results in nine triggers on the 16 ms timescale only.

The GRBs included in the catalog are listed in Table 1. The column contact is the number of the AGILE orbit in which the GRB was detected. The trigger time is the time of the GRB trigger signal (seconds from 1 January 2004); the celestial coordinates RA and DEC are given in decimal degrees and obtained from the relevant GCN circulars^2, the absence of decimals means that approximate values are obtained from the IPN data available online (Hurley et al. 2013). The column TH is the angle between the AGILE pointing direction and the direction of the GRB. The column other detections reports if the data for the GRB have been published also by other missions, or a GCN circular is issued for the detection. The GRBs for which very high energy gamma-rays have been detected by the AGILE Tracker (TR) have been highlighted.

The MCAL is an all-sky instrument, but for geometrical reasons it is more sensitive to GRBs coming from the AGILE pointing direction. In the years 2008-2009 AGILE was used to follow gamma transients pointing for many months on sources on the Galactic Plane and on Galactic Center. In Fig. 1 the GRB sky distribution is shown in galactic coordinates; a greater number of GRBs can be seen on the Galactic Center zone and around the Galactic Plane. A list of AGILE pointings for most of the reference period is reported by Pittori (Pittori et al. 2009).

4. Temporal analysis

For the temporal analysis of the GRBs we computed the T_{90} and T_{50} time intervals, defined as the intervals containing the 90% and 50% of the total counts of gamma rays above the background. Our T_{50} and T_{90} measure the time width of the high energy part of the GRB (above ∼ 300 keV) which is seen by MCAL. We adopted the method of Koshut (Koshut et al. 1996):

- the counts in the photon list are grouped in temporal bins of 0.01 s; from which we obtained a light curve for the GRB.

- By visual analysis of the light curve, two background-only time intervals were identified, one before and one after the

2 GCN: A service of the Astrophysics Science Division (ASD) at NASA’s GSFC: http://gcn.gsfc.nasa.gov/

Fig. 2. GRB 080303B, time analysis. In the upper plot we show the GRB time profile; the two background zones are the time intervals: -60/-10 and 40/50 s. In the lower plot we show the cumulative time profile; the lines defining the fluence, T_{50} and T_{90} are shown as well. For a better visualization, a 0.1 s time binning has been used in this figure.

burst. We kept these time intervals as long as possible, to achieve a better background subtraction; for their visual identification, a binning of 0.1 sec was sometimes used, which does not allow for an analysis of short GRBs, but gives less noisy time profiles.

- The two selected intervals were used to define a background model in the GRB time interval by a low-order interpolating polynomial (most of the time first order was sufficient).

- The cumulative integral of the background-subtracted counts was computed for each time bin; thus we obtained a cumulative time profile.

- The mean values of the two background-only intervals in the cumulative time profile were computed. These values define a minimum and a maximum fluence level, expressed in counts. The mean value of the background region before the GRB should theoretically be zero, but in practice, as also noticed by Koshut (Koshut et al. 1996), it can be different from zero, due to background fluctuations.

- A GRB fluence (in counts) is defined as the difference between the maximum and the minimum fluence level. The time interval between the points in which the cumulative time profile is 5% and 95% of the GRB fluence defines the T_{90} interval. In the same way, the time points at 25% and 75% define T_{50}. The uncertainties in T_{50} and T_{90} were computed following Koshut (Koshut et al. 1996).

In Fig. 2 an example of the procedure is shown; in the upper panel we plot the time profile of GRB 080803B along with the background zones and the line fitting the background values; in the lower panel the cumulative integral is shown along with the lines defining the fluence minimum and maximum levels, the T_{90} and T_{50} intervals.

We performed a time analysis for 84 GRBs from our sample; GRB 080603B (contact number 5750) is confirmed by the IPN network, but too faint for a time analysis. The results are shown in Table 2. T_{50} and T_{90}, their starting times and the boundaries of the background intervals are reported. All times are given in seconds measured from the trigger time. The column T_{90} fluence contains the background-subtracted counts in the GRB region.

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

T_{90} (s) T_{50} (s) Counts in T_{90} min. value 0.04 0.02 66 max. value 89.81 21.44 12472 average 12.61 4.64 1822 Table 3. GRB temporal analysis summary

Fig. 3. T_{90} distribution.

Our T_{50} and T_{90} measurements refer to the high-energy part of the GRB; for this reason the duration measured by other instruments, which are sensitive to lower energies, are often longer (see Paciesas et al. 2012): we did not see the lower energy tails of some GRBs.

The main features of our sample are summarized in Table 3; our average value for T_{90} is about 13 sec. We had no very long GRBs in our sample.

The distributions of T_{90} and T_{50} are shown in Fig. 3 and Fig. 4. The data are consistent with the well-known bimodal distribution (Kouveliotou et al. 1993). We see a clear peak for long GRBs and a peak for short GRBs that is less resolved due to the limited statistics for this group. The two maxima are observed at T_{90} ∼ 0.3 s and T_{90} ∼ 8 s. Considering as short the GRB with T_{90} < 2 s, we have 21% of short GRB, a value consistent with the results of instruments operating in the hard X-ray range: Paciesas reported a value of 18% for the Fermi data (with an uncertainty of 3-4%) and of 24% for the BATSE catalog (Paciesas et al. 2012); see also Kouveliotou (Kouveliotou et al. 1993) and Frontera (Frontera et al. 2009) for previous samples.

5. Spectral analysis

Only a subsample of the GRBs in the catalog have enough photons to allow for a spectral analysis. Background subtraction is a critical point in the analysis, and we can obtain reliable spectra only for GRBs with more than ∼ 1000 backgroundsubtracted counts in the T_{90} interval. The MCAL effective area

Fig. 4. T_{50} distribution.

has a cutoff below ∼ 350 keV, for this reason a fit of our data with a Band function (Band et al. 1993) is, in most cases, not suitable, since we cannot constrain the low-energy part of the spectra. We instead used a simple power law function to describe the GRB high-energy part between 400 keV and 5 MeV: f (E) = N ×(E/E0)^{−β}, with a photon index β that is similar to the β index in the GRB Band model. We processed here all GRBs in the same way, fitting with the same simple power-law function, to obtain a set of homogeneous results. A detailed analysis for some high flux GRBs, such as GRB 090510, has been published elsewhere (Giuliani et al. 2008, Giuliani et al. 2010).

The uncertainty in the response matrix for gamma-rays coming from below the instrument is higher. These gamma-rays cross the service module of the satellite before hitting MCAL. For this reason we considered only the GRBs with a direction of less than 90 degrees from the AGILE pointing direction.

Our procedure consisted of the following steps:

- Obtaining the spectra of the detected GRB photons from the photon list. The photon list produced by the MCAL onboard software was used to obtain the spectrum of energy released in MCAL by the GRB during the T_{90} time interval. A background spectrum was also extracted from the data, summing over a time interval as long as possible before the trigger (30–50 s). A large background interval smoothes the shorttime oscillations in the background, which can introduce errors when the burst fluence is low. The energies released in all bars that correspond to a single event, were summed; the bars with an energy lower than 400 keV were discarded in this phase to minimize the contribution of possible uncertainties in diode calibrations, which mostly affect the low-energy events. The spectra were binned at a fixed bin size of 50 keV, up to 10 MeV (200 bins). The spectra were produced in the FITS format (Wells et al, 1981).

- Dead-time correction. The anti-coincidence (AC) veto system of the AGILE tracker (Perotti et al. 2006) is active during the GRB. This system also affects the MCAL counts, blocking MCAL for 5.4 μs for each AC event. With a par-

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

Fig. 5. GRB 080916C: spectral data and folded model from XSPEC (continuous line). The power law model is ∼ E^{−2.24}.

ticle background rate of ∼ 10 kHz and a GRB photon rate of ∼ 15 − 30 kHz, this dead-time effect amounts to about 10 − 20%. To account for this effect, we considered an average of the AC rates during the GRB and the background interval and decreased the exposure time in a consistent way.

- Fitting. The XSPEC program (Arnaud 1996) was used for fitting. We used the XSPEC CSTAT statistic, a modified version of the Cash statistic (Cash, 1979), which is more appropriate when counts are low. A response matrix and auxiliary response files were computed for each GRB with the same energy binning of the spectra and considering the angle between the GRB direction and the AGILE axis. The discarding of bars with a low energy deposit was accounted for. The method used for the computation of the response matrix will be detailed in a forthcoming article (2013, in preparation). A power law function f (E) = N × (E/500 keV)^{−β} was used for the fits over the energy range 400–5000 keV.

In Fig. 5, an example of a GRB background-subtracted spectrum is shown along with the folded model from the XSPEC fit (continuous line); the error bars are one-sigma poisson errors. Some energy bins over ∼ 1.5 MeV were merged.

Spectral data are shown in Table 4, where the spectral index β and the normalization parameter N are reported along with the model flux integrated over the energy interval 400 − 5000 keV and averaged over T_{90}. We also report the fluence, integrated over T_{90}, the CS T AT value, and the number of degrees of freedom (dof) from the XSPEC fit.

In Fig. 6 we show the distribution of the power law index β. Most of the values are between 2 and 3. A similar distribution is found for the Band model β parameter in the Fermi sample of Bissaldi (Bissaldi et al. 2011) or in the Fermi spectral catalog (Goldstein et al. 2012), but we see a somewhat greater number of high β GRBs. We are still investigating this effect; a detailed comparison of our spectral data with other samples will be presented in a forthcoming paper (2013, in preparation). The model fluence distribution is shown in Fig. 7.

6. Conclusions

We presented the GRB data collected with the AGILE MCAL instrument between February 2008 and October 2009. The effective area of MCAL decreases below ∼ 350 keV, and this GRB

Fig. 6. Power law index β distribution.

Fig. 7. Fluence distribution.

sample consists of hard events, with data up to the MeV range. Our temporal analysis shows a T_{90} distribution consistent with other studies, in spite of our higher energy range. We also presented a spectral analysis for a subsample of our data: we fitted our data with a simple power law. Our spectral index is comparable to the β parameter in the classical Band GRB model. Our results are similar to other studies, but with somewhat lower spectral indexes.

Acknowledgements. AGILE is a mission of the Italian Space Agency (ASI), with co-participation of INAF (Istituto Nazionale di Astrofisica) and INFN

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

(Istituto Nazionale di Fisica Nucleare). This work was carried out in the frame of the ASI-INAF agreement I/028/12/0.

Alessandro Ursi participated to a first step of the data analysis.

References

Aptekar, R.L., Frederiks D.D., Golenetskii S.V., et al., 1995, Space Sci. Rev., 71, 265 Arnaud, K.A., 1996, Astronomical Data Analysis Software and Systems V, Jacoby G. and Barnes J. eds. ASP Conf. Series vol. 101, p17.

Band, D. ,Matteson, J., Ford, L. et al., 1993, ApJ, 413, 281 Bissaldi, E., von Kienlin, A., Kouveliotou, C. et al., 2011, ApJ, 733, 97 Cash, W., 1979, ApJ, 228, 939 Prest, M., Barbiellini, G., Bordignon, G., et al., 2003, Nucl. Instr. Meth. A, 501,280 Bulgarelli, A., Argan, A., Barbiellini, G., et al., 2010, Nucl. Instr. Meth. A, 614,213 Feroci, M., Costa, E., Soffitta E., et al., 2007, Nucl. Instr. Meth. A, 581,728 Frontera, F., Guidorzi, C., Montanari, E., et al., 2009, ApJS, 180, 192 Fuschino, F., Labanti, C., Galli, M., et al., 2008, Nucl. Instr. Meth. A, 588,17 Gehrels, N., Chincarini, G., Giommi P., et al., 2004, ApJ, 611, 1005 Giuliani, A., Mereghetti, S., Fornari F., et al., 2008, A&A, 491, L25 Giuliani, A., S.Cutini, S., C. Pittori, C., et al., 2009, GRB Coordinates Network, Circular 9075 Giuliani, A., Fuschino, F., Vianello G., et al., 2010, ApJ, 708, L84 Goldstein, A., Burgess, J.M., Briggs, M.S., et al., 2012 ApJS, 199, 19 Hurley, K., Rau, A., von Kienlin, A., et al. 2004, in ESA Special Publication, Vol. 552, 5th INTEGRAL Workshop on the INTEGRAL Universe, ed. V. Schoenfelder, G. Lichti, & C. Winkler, 645 Hurley, K., Palshin, V.D., Aptekar, R.L., et. al., 2013, arXiv e-print 1301.3522 [astro-ph.HE] Koshut, T.M., Precias, W.S., Kouvelioutou C. et al., 1996, ApJ, 463, 570 Kouveliotou, C., Meegan, C.A., Fishman, G.J. et al., 1993, ApJ, 413, L101 Labanti, C., Marisaldi, M., Fuschino, F., et al., 2009, Nucl. Instr. Meth. A, 598,470 Lin, R.P., Dennis, B.R., Hurford, G.J., et al., 2002, Sol. Phys., 210, 3 Marisaldi, M., Labanti, C., Fuschino, F., et al., 2008, A&A, 490, 1151 Marisaldi, M., Fuschino, F., Labanti, C., et al., 2010, JGR, 115, A00E13 Meegan, C., Lichti, G., Bhat, P. N. et al., 2009, ApJ, 702, 791 Mézáros, P., 2006, Rep. Prog. Phys. 69, 2259 Michelson P.F., Atwood, W.B., and Ritz, S. 2010, Rep. Prog. Phys. 73 074901 Mitsuda K., Bautz M., Inoue H. et al., 2007, Publ. Astron. Soc. Japan , 59, 1 Moretti, E., Longo, F., Barbiellini, G., et al., 2009, GRB Coordinates Network, Circular 9069 Paciesas, W.S., Megegan C.A., Pendleton G.N., et al., 1999, ApJS, 122, 465 Paciesas, W. S., Megegan C. A., von Kienlin A., et al., 2012, ApJS, 199 18 Perotti, F., Fiorini, M., Incorvaia, et al., 2006, NIM A, 556, 228 Pittori, C., Verrecchia, F., Chen. A.W., et al., 2009 A&A, 506, 1563 Tavani, M., Barbiellini, G., Argan, A., et al., 2009, A&A, 502, 995 Wells, D. C., Greisen, E. W., Harten, R. H. , 1981, A&AS, 44, 363 Winkler, C., Courvoisier, T., Di Cocco, G., et al., 2003, A&A, 411, L1 ”The AGILE MCAL calibrations”, 2013, in preparation.

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

Table 1. Main GRB data. Boldface GRBs have high-energy photons detected by the AGILE Tracker. For the detection by other missions the following acronyms are used: INT for the INTEGRAL satellite (Winkler et al. 2003), RH for RHESSI (Lin et al. 2002), SW for the SWIFT satellite (Gehrels et al. 2004), KW for KONUS/Wind (Aptekar et al. 1995), SU for Suzaku (Mitsuda et al. 2007), FE for Fermi (Michelson et al. 2010, Meegan 2009), SA for SuperAGILE, TR for the AGILE Tracker, OPT means optical or radio followup, IPN means that a tentative GRB position was obtained by IPN data or that a GCN was issued by the IPN.

Contact Trigger time Name Date RA DEC TH Other detections ID sec.from 01-01-2004 UTC deg. deg. deg.

4172 129942289.420 080212B 2008-02-12 23:04:49.420 123 22 98 IPN 4453 131664877.825 080303B 2008-03-03 21:34:37.825 270 -26 108 IPN 4673 133014356.656 080319C 2008-03-19 12:25:56.656 259.0 55.4 84 INT KW SU SW OPT 4798 133776179.856 080328 2008-03-28 08:02:59.856 80.5 47.5 155 INT KW SU SW OPT 4946 134685725.108 080407 2008-04-07 20:42:05.108 183 20 76 KW IPN 5030 135199576.492 080413 2008-04-13 19:26:16.492 287.3 -27.7 49 KW SW OPT 5370 137281445.197 080507B 2008-05-07 21:44:05.197 247 -24 95 IPN 5462 137843756.822 080514B 2008-05-14 09:55:56.822 322.8 0.7 37 KW SU IPN/SA TR SW OPT 5665 139084070.650 080528 2008-05-28 18:27:50.650 77 28 93 KW IPN 5692 139248696.743 080530 2008-05-30 16:11:36.743 186 0 69 IPN 5750 139606694.696 080603B 2008-06-03 19:38:14.696 176.5 68.1 74 INT KW SW OPT 5799 139903643.150 080607 2008-06-07 06:07:23.150 194.9 15.9 114 INT KW RH SW OPT 5837 140136578.898 080609 2008-06-09 22:49:38.898 262 -26 132 IPN 5852 140231946.977 080611 2008-06-11 01:19:06.977 83 27 85 IPN 5887 140440358.003 080613B 2008-06-13 11:12:38.003 173.8 -7.1 39 INT KW SW OPT 6044 141402060.830 080624 2008-06-24 14:21:00.830 ... ... ... 6258 142712152.973 080709 2008-07-09 18:15:52.973 245 -22 91 IPN 6328 143142769.240 080714 2008-07-14 17:52:49.240 188.1 -60.3 13 KW SW OPT 6345 143246921.106 080715 2008-07-15 22:48:41.106 214.7 65.9 66 IPN FE 6422 143720706.723 080721 2008-07-21 10:25:06.723 224.5 -11.7 49 KW RH INT SW 6452 143904198.133 080723B 2008-07-23 13:23:18.133 176.8 -60.2 13 INT KW SA SW OPT 6458 143941060.261 080723D 2008-07-23 23:37:40.261 105.3 71.1 134 FE 6506 144231210.935 080727B 2008-07-27 08:13:30.935 276.9 1.2 101 KW SW OPT 6600 144807750.714 080803B 2008-08-03 00:22:30.714 108 22 50 IPN 6800 146029932.250 080817 2008-08-17 03:52:12.250 151.3 -19.3 57 FE 6919 146758428.560 080825C 2008-08-25 14:13:48.560 232.2 -4.9 75 FE 7073 147700735.012 080905 2008-09-05 11:58:55.012 287.67 -18.87 139 FR SW OPT 7083 147762311.241 080906B 2008-09-06 05:05:11.241 182.8 -6.4 115 FE 7221 148608766.336 080916C 2008-09-16 00:12:46.336 119.8 -56.6 86 FE IPN KW SW OPT 7255 148815876.398 080918 2008-09-18 09:44:36.398 22 14 107 IPN 7445 149980665.476 081001 2008-10-01 21:17:45.476 276.6 -8.7 21 KW SA SW OPT 7483 150211576.844 081004 2008-10-04 13:26:16.844 113 -3 147 IPN 7889 152700294.277 081102B 2008-11-02 08:44:54.277 231.2 35.2 53 FE 7935 152976706.752 081105 2008-11-05 13:31:46.752 4.0 3.5 66 IPN SW 8006 153411942.992 081110 2008-11-10 14:25:42.992 123.6 21.2 124 FE 8165 154384526.221 081121 2008-11-21 20:35:26.221 89.3 -60.6 141 FE KW SW OPT 8216 154698820.603 081125 2008-11-25 11:53:40.603 42.7 -18.9 84 FE 8330 155397093.361 081203B 2008-12-03 13:51:33.361 228.8 44.4 69 KW SU SW OPT 8420 155950316.320 081209 2008-12-09 23:31:56.320 45.3 63.5 52 FE IPN KW 8502 156451717.870 081215 2008-12-15 18:48:37.870 135.0 53.8 89 FE IPN KW 8593 157006438.184 081222 2008-12-22 04:53:58.184 22.75 -34.10 88 FE KW SW OPT 8631 157238275.145 081224 2008-12-24 21:17:55.145 201.7 75.1 59 FE SU SW 8712 157735152.060 081230B 2008-12-30 15:19:12.060 ... ... ... 8747 157949728.040 090102 2009-01-02 02:55:28.040 128.2 33.1 94 KW SW 9156 160452584.144 090131 2009-01-31 02:09:44.144 353.0 16.4 55 FE SU 9179 160595218.112 090201 2009-02-01 17:46:58.112 92.0 -46.6 139 KW SW OPT 9260 161088448.472 090207B 2009-02-07 10:47:28.472 ... ... ... 9508 162605543.649 090225 2009-02-25 00:12:23.649 358.1 61.0 19 FE 9553 162881600.901 090228 2009-02-28 04:53:20.901 106.8 -24.3 111 FE 9621 163300476.010 090305B 2009-03-05 01:14:36.010 155.1 68.1 120 FE 9731 163969232.676 090312 2009-03-12 19:00:32.676 ... ... ... 9951 165317810.892 090328 2009-03-28 09:36:50.892 90.9 -41.9 105 FE KW SW 9955 165344824.903 090328B 2009-03-28 17:07:04.903 155.7 33.4 132 FE IPN 9972 165446602.621 090329 2009-03-29 21:23:22.621 ... ... ... 10007 165659724.000 090401B 2009-04-01 08:35:24.000 95.09 -8.96 41 KW SA SU TR SW OPT 10139 166467473.377 090410 2009-04-10 16:57:53.377 334.96 15.41 54 SU SW OPT 10335 167667129.448 090424 2009-04-24 14:12:09.448 189.5 16.8 103 FE SU SW OPT 10364 167848413.139 090426C 2009-04-26 16:33:33.202 82.7 -9.7 143 FE 10383 167959586.511 090427 2009-04-27 23:26:26.511 235.9 13.5 71 IPN KW 10553 168999780.445 090510 2009-05-10 00:23:00.445 333.56 -26.61 61 FE SU SW TR OPT 10741 170155676.304 090523 2009-05-23 09:27:56.304 30 11 108 IPN

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

Table 1. continued. Main GRB data.

Contact Trigger time Name Date RA DEC TH Other detections ID sec.from 01-01-2004 UTC deg. deg. deg.

10814 170598152.774 090528B 2009-05-28 12:22:32.774 312.2 32.7 28 FE SU 10832 170707316.602 090529C 2009-05-29 18:41:56.602 ... ... ... 10860 170879756.431 090531B 2009-05-31 18:35:56.492 252.07 -36.02 82 FE SW OPT 10999 171732798.963 090610 2009-06-10 15:33:25.936 84.2 35.4 84 FE 11027 171903051.103 090612 2009-06-12 14:50:51.103 81.1 17.8 92 FE 11092 172299598.562 090617 2009-06-17 04:59:58.562 78.9 15.7 91 FE SU 11108 172398504.772 090618 2009-06-18 08:28:24.772 294.0 78.4 38 FE KW SA SU SW OPT 11137 172575386.596 090620 2009-06-20 09:36:26.596 237.4 61.2 57 FE 11404 174209913.464 090709 2009-07-09 07:38:33.464 289.9 60.7 48 KW SA SU SW OPT 11513 174876569.696 090717 2009-07-17 00:49:29.696 86.8 -64.2 152 FE SU 11514 174883231.619 090717B 2009-07-17 02:40:31.619 247.0 23.0 68 FE 11541 175051886.412 090719 2009-07-19 01:31:26.412 341.3 -67.9 133 FE KW 11565 175194176.902 090720B 2009-07-20 17:02:56.905 203.0 -54.8 155 FE KW IPN 11851 176945288.503 090809B 2009-08-09 23:28:08.503 93.5 0.1 89 FE 11914 177324581.259 090814C 2009-08-14 08:49:41.259 332.5 58.9 154 FE 11993 177813526.664 090820 2009-08-20 00:38:46.664 87.7 27.0 130 FE OPT 12044 178128673.156 090823 2009-08-23 16:11:13.156 128.67 60.6 141 IPN KW SW 12107 178511020.971 090828 2009-08-28 02:23:40.971 124.4 -26.1 72 FE 12129 178646894.468 090829 2009-08-29 16:08:14.468 329.2 -34.2 64 FE SU 12156 178811964.864 090831D 2009-08-31 13:59:24.864 ... ... ... 12269 179505087.102 090908 2009-09-08 14:31:27.102 ... ... ... 12466 180709001.651 090922 2009-09-22 12:56:42.137 17.1 74.3 117 FE 12616 181629345.746 091003 2009-10-03 04:35:45.746 251.1 37.2 67 FE KW SU SW OPT 12714 182227390.920 091010 2009-10-10 02:43:10.920 298.7 -22.5 9 FE KW SA SU SW OPT

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

Table 2. GRB temporal data.

Contact Name T_{90} T_{90} start T_{50} T_{50} start T_{90} Fluence Background intervals ID sec. sec. from trigger sec. sec. from trigger counts sec. from trigger

4172 080212B 6.16 ± 3.83 0.265 2.11 ± 0.46 1.125 1931 ± 154 -60 -10 20 30 4453 080303B 20.09 ± 3.45 5.345 5.84 ± 0.96 13.165 6775 ± 215 -30 -10 40 50 4673 080319C 19.22 ± 3.64 -10.815 4.41 ± 3.36 0.295 1101 ± 142 -30 -15 15 30 4798 080328 15.42 ± 11.14 4.355 11.83 ± 2.53 6.425 1079 ± 102 -30 -5 25 40 4946 080407 20.16 ± 1.86 2.215 8.72 ± 0.74 6.905 7427 ± 159 -30 -15 30 50 5030 080413 30.28 ± 15.59 -8.395 7.13 ± 2.47 7.175 873 ± 144 -30 -10 25 30 5370 080507B 0.22 ± 0.25 0.045 0.03 ± 0.04 0.225 83 ± 18 -0.5 0 1 2 5462 080514B 6.09 ± 4.74 0.245 3.73 ± 0.96 2.075 1347 ± 117 -20 -5 10 20 5665 080528 0.24 ± 1.71 0.025 0.11 ± 0.06 0.065 296 ± 48 -10 -1 1 7 5692 080530 1.43 ± 2.19 -0.365 0.16 ± 0.14 0.215 457 ± 51 -5 -1 1 5 5799 080607 10.38 ± 3.03 1.175 4.75 ± 0.49 4.585 4165 ± 119 -80 -10 20 30 5837 080609 20.60 ± 0.61 1.105 10.42 ± 0.92 6.115 12472 ± 180 -80 -10 30 45 5852 080611 0.04 ± 0.06 0.035 0.02 ± 0.01 0.055 342 ± 24 -50 -1 1 20 5887 080613B 18.33 ± 6.71 -0.045 9.24 ± 2.65 1.645 1465 ± 147 -20 -5 20 40 6044 080624 23.64 ± 8.28 -14.565 12.52 ± 3.18 -10.165 1005 ± 149 -40 -20 20 30 6258 080709 20.94 ± 1.84 1.825 11.74 ± 0.50 4.225 7944 ± 163 -40 -10 30 50 6328 080714 39.65 ± 20.64 -7.085 11.99 ± 8.12 3.565 1021 ± 158 -18 -10 35 50 6345 080715 26.39 ± 7.72 -6.065 7.06 ± 17.82 -0.505 464 ± 137 -25 -10 20 40 6422 080721 15.64 ± 1.13 1.045 5.97 ± 0.51 9.355 5460 ± 198 -25 -10 20 40 6452 080723B 45.65 ± 1.09 -43.975 13.44 ± 1.03 -14.365 3443 ± 206 -70 -50 10 40 6458 080723D 43.56 ± 2.70 4.115 8.40 ± 5.83 12.445 3930 ± 235 -70 -10 60 70 6506 080727B 1.99 ± 1.18 -0.135 0.45 ± 1.12 0.095 227 ± 54 -5 -1 5 10 6600 080803B 17.50 ± 13.55 0.285 5.47 ± 4.47 3.895 617 ± 144 -40 -5 20 30 6800 080817 17.84 ± 2.03 -0.625 9.44 ± 0.77 3.795 4239 ± 175 -30 -10 30 60 6919 080825C 3.67 ± 1.29 0.605 1.51 ± 0.25 1.425 1069 ± 69 -10 -1 7 15 7073 080905 1.26 ± 3.53 0.005 0.80 ± 0.79 0.135 164 ± 42 -10 -1 2 6 7083 080906B 4.78 ± 6.87 0.555 0.95 ± 3.50 0.865 317 ± 94 -20 -3 10 20 7221 080916C 39.31 ± 7.35 0.695 21.44 ± 5.16 3.985 3778 ± 215 -60 -10 50 80 7255 080918 4.64 ± 2.87 -0.915 0.85 ± 0.15 1.285 1395 ± 89 -8 -3 5 10 7445 081001 5.40 ± 3.10 -1.495 1.24 ± 1.75 0.165 500 ± 68 -6 -2 7 10 7483 081004 0.13 ± 1.73 0.005 0.04 ± 0.05 0.015 197 ± 45 -5 -1 1 5 7889 081102B 7.30 ± 14.06 3.525 1.70 ± 2.08 5.945 346 ± 74 -30 0 15 50 7935 081105 6.17 ± 1.63 0.045 2.50 ± 0.68 1.265 3154 ± 107 -30 -2 8 40 8006 081110 3.64 ± 1.76 -2.000 0.64 ± 0.38 0.135 489 ± 44 -30 -2 25 40 8165 081121 18.96 ± 2.61 0.935 6.38 ± 2.40 7.915 1805 ± 123 -25 -1 25 40 8216 081125 4.12 ± 5.34 -2.225 1.94 ± 1.27 -1.135 360 ± 60 -25 -3 5 25 8330 081203B 20.16 ± 14.88 0.955 5.28 ± 2.60 6.885 1027 ± 116 -40 -4 20 40 8420 081209 0.13 ± 0.29 0.045 0.06 ± 0.04 0.055 184 ± 30 -0.5 -0.2 0.4 0.8 8502 081215 4.92 ± 0.98 -0.585 2.46 ± 0.40 0.385 2365 ± 118 -20 -5 10 20 8593 081222 6.69 ± 6.71 0.995 3.48 ± 2.95 2.125 362 ± 85 -5 -1 10 15 8631 081224 7.80 ± 2.81 0.385 2.45 ± 0.46 1.135 2706 ± 133 -20 -5 15 30 8712 081230C 2.52 ± 1.81 0.045 1.19 ± 1.39 0.395 225 ± 60 -5 -1 5 10 8747 090102 14.19 ± 3.00 5.205 9.27 ± 1.43 8.455 1137 ± 106 -20 -5 25 40 9156 090131 32.41 ± 11.12 -16.790 9.74 ± 19.45 0.100 624 ± 154 -28 -20 15 40 9179 090201 25.47 ± 8.81 -12.045 10.83 ± 2.43 1.105 2200 ± 195 -40 -20 20 40 9260 090207B 0.10 ± 0.07 -0.005 0.06 ± 0.04 0.005 66 ± 13 -1 -0.2 0.2 0.3 9508 090225 0.28 ± 0.16 -0.005 0.09 ± 0.13 0.095 82 ± 15 -0.5 0 0.4 0.8 9553 090228 0.09 ± 0.53 0.005 0.06 ± 0.02 0.015 316 ± 29 -0.8 -0.2 0.4 0.8 9621 090305B 0.53 ± 0.97 -0.145 0.27 ± 0.13 0.025 186 ± 33 -10 -2 1 5 9731 090312 8.49 ± 14.91 2.545 4.45 ± 2.04 5.325 636 ± 77 -22 -5 15 35 9951 090328 26.98 ± 4.59 0.275 10.72 ± 1.78 6.605 4420 ± 175 -25 -5 35 50 9955 090328B 0.15 ± 0.22 -0.025 0.07 ± 0.04 0.005 167 ± 26 -0.6 -0.2 0.3 1 9972 090329 4.15 ± 4.13 -1.505 1.39 ± 0.40 0.205 834 ± 37 -18 -4 10 30 10007 090401B 8.98 ± 0.29 0.915 1.6 ± 0.19 7.355 4041 ± 119 -10 -1 12 22 10139 090410 12.19 ± 12.60 2.035 4.07 ± 4.61 5.065 592 ± 102 -5 0 20 30 10335 090424 6.78 ± 6.41 -2.755 2.96 ± 0.47 0.355 854 ± 92 -20 -5 5 15 10364 090426C 4.17 ± 4.60 -1.395 1.17 ± 1.56 0.425 216 ± 63 -8 -2 15 25 10383 090427 2.97 ± 1.03 8.045 0.98 ± 0.06 8.825 6325 ± 179 -20 -5 15 30 10553 090510 5.19 ± 5.91 0.065 0.29 ± 0.22 0.125 1553 ± 64 -20 -5 15 30 10741 090523 1.12 ± 1.05 -0.855 0.13 ± 0.12 0.055 188 ± 33 -25 -1 2 10 10814 090528B 30.36 ± 19.88 1.285 15.92 ± 9.16 7.205 1271 ± 151 -30 -5 35 50 10832 090529D 15.83 ± 8.09 -5.005 3.73 ± 11.31 4.355 386 ± 81 -30 -5 15 32 10860 090531B 1.66 ± 2.06 -0.975 0.43 ± 0.38 0.015 258 ± 54 -50 -2 10 40 10999 090610 8.82 ± 7.38 -1.415 8.82 ± 7.38 3.165 293 ± 77 -25 -2 20 45 11027 090612 3.12 ± 8.38 -0.845 1.32 ± 0.81 0.125 716 ± 109 -25 -5 5 25

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

Table 2. continued. GRB temporal data.

Contact Name T_{90} T_{90} start T_{50} T_{50} start T_{90} Fluence Background intervals ID sec. sec. from trigger sec. sec. from trigger counts sec. from trigger

11092 090617 0.67 ± 1.17 -0.305 0.20 ± 0.31 -0.005 83 ± 19 -4 -0.3 0.3 4 11108 090618 89.81 ± 11.74 3.055 9.54 ± 3.20 63.285 10614 ± 271 -30 -5 140 150 11137 090620 13.61 ± 3.76 -7.695 3.67 ± 2.55 -1.275 737 ± 101 -40 -10 15 25 11404 090709 53.22 ± 11.00 3.385 20.67 ± 2.88 23.465 4242 ± 225 -40 -10 70 90 11513 090717 8.42 ± 12.02 3.375 5.19 ± 3.68 4.875 460 ± 74 -15 -5 15 30 11514 090717B 0.37 ± 1.06 -0.035 0.11 ± 0.11 0.135 87 ± 20 -3 -1 1 2 11541 090719 7.28 ± 13.24 0.275 3.97 ± 1.03 1.715 2860 ± 181 -20 -15 20 40 11565 090720B 6.21 ± 0.14 0.015 5.73 ± 0.33 0.135 1234 ± 83 -30 -9 25 45 11851 090809B 6.81 ± 14.56 6.655 1.71 ± 1.04 8.055 877 ± 114 -10 -1 20 30 11914 090814C 0.28 ± 1.64 -0.075 0.11 ± 0.11 -0.005 137 ± 28 -10 -0.5 1 2 11993 090820 8.18 ± 2.03 1.055 3.36 ± 0.25 2.435 6454 ± 123 -30 -10 20 40 12044 090823 5.33 ± 8.37 -0.325 2.44 ± 1.26 0.925 806 ± 107 -20 -5 10 25 12107 090828 8.46 ± 9.72 -3.175 2.90 ± 1.72 0.125 537 ± 88 -20 -5 10 25 12129 090829 23.24 ± 5.19 1.595 7.04 ± 1.14 7.895 4244 ± 174 -30 -5 35 50 12156 090831D 2.10 ± 0.23 -2.005 0.73 ± 1.10 -0.695 169 ± 15 -6 -2 15 20 12269 090908C 4.05 ± 6.57 0.065 0.72 ± 0.68 0.305 380 ± 54 -10 -5 5 10 12466 090922 15.92 ± 5.24 -9.045 4.71 ± 10.00 -0.075 466 ± 87 -60 -10 20 30 12616 091003 24.68 ± 11.40 -4.125 16.45 ± 1.17 2.365 2397 ± 170 -40 -10 30 45 12714 091010 3.17 ± 1.95 -1.495 2.24 ± 1.93 -1.225 260 ± 67 -8 -3 4 8

M. Galli et al.: AGILE Mini-Calorimeter gamma-ray burst catalog

Table 4. GRB spectral data.

Contact Name β N Flux Fluence CS T AT dof ID ph./cm^2/s/keV ergs/cm^2/s ergs/cm^2 at 500 keV 400-5000 keV in T_{90}

4673 080319C 2.26 + 0.43 - 0.34 5.42E-04 ± 1.13E-04 4.25e-07 8.17e-06 85.28 89 4946 080407 2.72 + 0.08 - 0.08 3.02E-03 ± 8.15E-05 1.65e-06 3.33e-05 116.66 89 5462^1 080514B 2.61 + 0.25 - 0.21 1.64E-03 ± 5.14E-05 9.68e-07 5.90e-06 84.31 89 5887 080613B 2.19 + 0.22 - 0.20 5.45E-04 ± 6.15E-05 4.57e-07 8.38e-06 113.42 89 6328 080714 2.14 + 1.24 - 0.83 2.09E-04 ± 7.27E-05 1.83e-07 7.26e-06 59.23 89 6452 080723B 2.93 + 0.34 - 0.29 6.26E-04 ± 9.22E-05 3.00e-07 1.37e-05 90.09 89 6800 080817 2.47 + 0.11 - 0.11 1.52E-03 ± 6.64E-05 1.00e-06 1.78e-05 107.25 89 6919 080825C 2.39 + 0.17 - 0.19 2.36E-03 ± 9.37E-05 1.65e-06 6.06e-06 69.03 89 7221 080916C 2.24 + 0.15 - 0.14 1.33E-03 ± 1.32E-04 1.06e-06 4.17e-05 90.58 89 7935 081105 2.21 + 0.09 - 0.09 2.94E-03 ± 1.80E-04 2.42e-06 1.49e-05 138.05 89 8330 081203B 2.65 + 0.36 - 0.30 6.08E-04 ± 6.97E-05 3.50e-07 7.06e-06 100.44 89 8502 081215 2.43 + 0.10 - 0.10 1.04E-02 ± 4.15E-04 7.07e-06 3.48e-05 86.40 89 8631 081224 2.79 + 0.12 - 0.11 3.28E-03 ± 1.66E-04 1.71e-06 1.33e-05 97.05 89 10007^2 090401B 2.14 + 0.07 - 0.07 2.79E-03 ± 1.48E-04 2.45e-06 2.20e-05 84.37 89 10383 090427 2.30 + 0.05 - 0.05 1.55E-02 ± 3.48E-04 1.18e-05 3.50e-05 108.55 89 10553^3 090510 1.43 + 0.11 - 0.11 1.08E-03 ± 7.28E-04 2.16e-06 1.12e-05 71.59 89 10814 090528B 2.55 + 0.31 - 0.27 4.45E-04 ± 6.90E-05 2.75e-07 8.35e-06 75.48 89 11108 090618 2.73 + 0.27 - 0.32 6.32E-04 ± 6.33E-05 3.43e-07 3.08e-05 78.96 89 11404 090709 2.66 + 0.19 - 0.17 6.51E-04 ± 6.36E-05 3.71e-07 1.97e-05 96.29 89 12129 090829 2.38 + 0.12 - 0.11 1.14E-03 ± 5.35E-05 8.07e-07 1.88e-05 130.16 89 12616 091003 2.72 + 0.26 - 0.23 7.57E-04 ± 7.11E-05 4.13e-07 1.02e-05 109.16 89

1Detailed analysis published (Giuliani et al. 2008).

2Detailed analysis published (Moretti et al. 2009, Giuliani et al. 2009). 3Detailed analysis published (Giuliani et al. 2010).