arXiv:1306.3667v1 [astro-ph.SR] 16 Jun 2013

STELLA NOVAE: FUTURE AND PAST DECADES ASP Conference Series, Vol. **Volume Number** P. A. Woudt and V. A. R. M. Ribeiro, eds © 2013 Astronomical Society of the Pacific

Observational study of the extremely slow nova V1280 Scorpii

H. Naito,^1 S. Mizoguchi,^2 A. Arai,^3 A. Tajitsu,^4 S. Narusawa,^3 M. Yamanaka,^5 M. Fujii,^6 T. Iijima,^7 K. Kinugasa,^8 M. Kurita,^9 T. Nagayama,^1 H. Yamaoka,^{10} and K. Sadakane^{11}

1Graduate School of Science, Nagoya University, Furo-cho, Chikusa-ku, Nagoya 464-8602, Japan

2Sendai Astronomical Observatory, Nishikigaoka, Aoba-ku, Sendai 989-3123, Japan

3Nishi-Harima Astronomical Observatory, University of Hyogo, Sayo-cho, Hyogo 679-5313, Japan

4Subaru Telescope, National Astronomical Observatory of Japan, 650 North A’ohoku Place, Hilo, HI 96720, USA

5Kwasan Observatory, Kyoto University, Kitakazan-ohmine-cho, Yamashina-ku, Kyoto 607-8471, Japan

6Fujii Kurosaki Observatory, 4500 Kurosaki, Tamashima, Kurashiki, Okayama 713-8126, Japan

7Astronomical Observatory of Padova, Asiago Section, Osservatorio Astrofisico, 36012 Asiago (Vi), Italy

8Nobeyama Radio Observatory, National Astronomical Observatory of Japan, Minamimaki, Minamisaku-gun, Nagano 384-1305, Japan

9Graduate School of Science, Kyoto University, Kitashirakawaoiwake-cho, Sakyo-ku, Kyoto 606-8502, Japan

10Graduate School of Sciences, Kyushu University, Hakozaki, Higashi-ku, Fukuoka 812-8581, Japan

11Astronomical Institute, Osaka Kyoiku University, Asahigaoka, Kashiwara, Osaka 582-8582, Japan

Abstract. We present multi-color light curves and optical spectra of V1280 Scorpii obtained from 2007 to 2012. It is shown that V1280 Sco is the extremely slow nova and the mass of white dwarf appears to be ∼ 0.6 M⊙ or lower. Blue-shifted multiple absorption lines of Na i D, Ca ii HK, and He i* are detected on high-resolution spectra. We also discuss that an approach using metastable He absorption lines is useful to investigate structures of nova shells.

1

2 H. Naito et al.

1. Introduction

V1280 Scorpii is a classical nova which was independently discovered by two Japanese amateur astronomers (Y. Nakamura and Y. Sakurai) at the position of R.A. = 16^h57^m41^s.0, Decl. = −32^∘20’ 36”.4 (equinox 2000.0) on 2007 February 4 at ninth visual magnitude (Yamaoka et al. 2007). Naito & Narusawa (2007) obtained a low dispersion spectrum on February 5.87 (one day after the discovery), and found that it had a smooth continuum together with the Balmer and Feii lines showing P Cygni profiles and confirmed that it was classified as a classical nova. After maximum light, it faded steadily for about 12 days, before undergoing a precipitous decline in visual magnitude caused by dust formation. As the dust shells expand and spread out, it became gradually brighter and it has kept a brightness at V and y magnitudes of each around 10 mag to this date (2012 August). V1280 Sco has a very unique light curve which has not been observed in novae before. We performed early follow-up spectroscopic observations mainly at the Nishi-Harima Astronomical Observatory, long-term photometric observations mainly at Osaka Kyoiku University, and high-dispersion spectroscopic observations at the Subaru Telescope.

2. Extremely Slow Evolution

The long-term photometric observations show that V1280 Sco decreased in brightness gradually at a very slow rate from its discovery to our last photometric observation in 2012; and that it has a very long plateau spanning over 1500 days in its light curve (Fig. 1). Furthermore, long-term spectroscopic observations show that the transition to the nebula phase defined by the appearance of both [O iii] 4959 and 5007 took around 50 months after the burst (see Fig. 14 in Naito et al. 2012); and that the wind continued to blow spanning over 1500 days after maximum light. By comparing V1280 Sco with other slow novae reported in the literature (V723 Cas; Iijima 2006, Hachisu & Kato 2004, GQ Mus; Hachisu et al. 2008), we conclude that this nova is going through the slowest evolution in history and the mass of white dwarf is likely to be ∼ 0.6 M⊙ or lower (Naito et al. 2012).

3. Multiple Absroption Lines

Multiple blue-shifted metastable He i* absorption lines at 3889 Å are found on the high-resolution spectra (see Fig. 2). This is the first detection of metastable He i* absorption lines in the ejected gas around novae. We also discovered similar multiple blue-shifted absorption lines of Na D and Ca HK (Sadakane et al. 2010). The results of analysis using these lines show that the ejected shells are consist of numerous clumpy gas which cover a significant part of the continuum emitting radiation region; and that the appearance of metastable He i* lines can be explained by the ionization of helium, caused by the increase in ultraviolet radiation accompanying temperature increase in the photosphere; and that the total mass of the ejected material can be estimated to be on the order of 10^{−4} M⊙ (Naito et al. 2013). Analysis using metastable He i* absorption lines was an unprecedented approach in nova research. We propose that this method could be very useful in measuring helium composition and the mass of shell, and in studying nova shell structures.

Observational study of the extremely slow nova V1280 Scorpii 3

Figure 1. Light curves in optical B, V, R_c, I_c, and y and NIR J, H, and K_s bands observed from 2007 to 2011 (Naito et al. 2012). NIR light curves in the early phase published by Das et al. (2008) are superimposed.

4. Structure of Ejected Shell

Chesneau et al. (2012) obtained high-spatial resolution mid-infrared images with the Very Large Telescope from 2009 to 2011, showing the dusty nebular around V1280 Sco is bipolar. It is implied that a large part of ejected mass is included in these bipolar lobes. They suggested that the intensities of two bipolar lobes are different due to an absorption effect; and that the southern lobe is closer to the observer than the northern one. Combined with the presence of absorbing gases on the line-of-sight shown in our observations, we can describe the structure of ejected shell as Fig. 3 (Naito et al. 2013).

References

Chesneau, O., Lagadec, E., Otulakowska-Hypka, M., Banerjee, D. P. K., Woodward, C. E., Harvey, E., Spang, A., Kervella, P., Millour, F., Nardetto, N., Ashok, N. M., Barlow, M. J., Bode, M., Evans, A., Lynch, D. K., O’Brien, T. J., Rudy, R. J., & Russell, R. W. 2012, A&A, 545, A63 Das, R. K., Banerjee, D. P. K., Ashok, N. M., & Chesneau, O. 2008, MNRAS, 391, 1874 Hachisu, I., & Kato, M. 2004, ApJ, 612, L57 Hachisu, I., Kato, M., & Cassatella, A. 2008, ApJ, 687, 1236 Iijima, T. 2006, A&A, 451, 563 Naito, H., Mizoguchi, S., Arai, A., Tajitsu, A., Narusawa, S., Yamanaka, M., Fujii, M., Iijima, T., Kinugasa, K., Kurita, M., Nagayama, T., Yamaoka, H., & Sadakane, K. 2012, A&A, 543, A86 Naito, H., & Narusawa, S. 2007, IAU Circ., 8803, 2 Naito, H., Tajitsu, A., Arai, A., & Sadakane, K. 2013, PASJ, 65, 37 Sadakane, K., Tajitsu, A., Mizoguchi, S., Arai, A., & Naito, H. 2010, PASJ, 62, L5 Yamaoka, H., Nakamura, Y., Nakano, S., Sakurai, Y., & Kadota, K. 2007, IAU Circ., 8803, 1

4 H. Naito et al.

Figure 2. Detection of multiple absorption lines of Na i D1, Ca ii H and He i* λ3889 (Naito et al. 2013).

Figure 3. A schematic view of ejected shell (clumpy gas) producing absorption lines of metastable He i* (Naito et al. 2013). Thin broken lines delineate boundaries of the nebula (Chesneau et al. 2012).