arXiv:1308.5129v2 [astro-ph.CO] 10 Dec 2013

PASJ: Publ. Astron. Soc. Japan , 1–??, © 2013. Astronomical Society of Japan.

A Study of Selection Methods for Hα Emitting Galaxies at z ∼ 1.3 for the Subaru/FMOS Galaxy Redshift Survey for Cosmology (FastSound)

Motonari TONEGAWA,^{1,2} Tomonori TOTANI,^{1,2} Masayuki AKIYAMA,^3 Gavin DALTON,^{4,11} Karl GLAZEBROOK,^5 Fumihide IWAMURO,^2 Masanao SUMIYOSHI,^2 Naoyuki TAMURA,^6 Kiyoto YABE,^7 Jean COUPON,^{8,9} Tomotsugu GOTO,^{10} and Lee R. SPITLER^{5,12,13} 1Department of Astronomy, The University of Tokyo, Bunkyo-ku, Tokyo 113-0033, Japan tonegawa@astron.s.u-tokyo.ac.jp 2Department of Astronomy, Kyoto University, Sakyo-ku, Kyoto 606-8502, Japan 3Astronomical Institute, Tohoku University, Aoba-ku, Sendai, Miyagi 980-8578 4Department of Physics, University of Oxford, Keble Road, Oxford, OX1 3RH, UK 5Centre for Astrophysics & Supercomputing, Swinburne University of Technology, P.O. Box 218, Hawthorn, VIC 3122, Australia 6Kavli Institute for the Physics and Mathematics of the Universe, The University of Tokyo 7National Astronomical Observatory of Japan, 2-21-1 Osawa, Mitaka, Tokyo 181-8588 8Astronomical Observatory of the University of Geneva, ch. d’Ecogia 16, 1290 Versoix, Switzerland 9Institute of Astronomy and Astrophysics, Academia Sinica, P.O. Box 23-141, Taipei 10617, Taiwan 10Dark Cosmology Centre Niels Bohr Institute, University of Copenhagen Juliane Maries Vej 30, 2100 Copenhagen O, Denmark 11STFC RALSpace, Harwell Oxford, OX11 0QX, UK 12Australian Astronomical Observatory, P.O. Box 296 Epping, NSW 1710, Australia 13Department of Physics & Astronomy, Macquarie University, Sydney, NSW 2109, Australia

(Received 2013 August 19; accepted )

Abstract

The efficient selection of high-redshift emission galaxies is important for future large galaxy redshift surveys for cosmology. Here we describe the target selection methods for the FastSound project, a redshift survey for Hα emitting galaxies at z = 1.2–1.5 using Subaru/FMOS to measure the linear growth rate fσ_8 via Redshift Space Distortion (RSD) and constrain the theory of gravity. To select ∼400 target galaxies in the 0.2 deg^2 FMOS field-of-view from photometric data of CFHTLS-Wide (u^∗g^′r^′i^′z^′), we test several different methods based on color-color diagrams or photometric redshift estimates from spectral energy distribution (SED) fitting. We also test the improvement in selection efficiency that can be achieved by adding near-infrared data from the UKIDSS DXS (J). The success rates of Hα detection with FMOS averaged over two observed fields using these methods are 11.3% (color-color, optical), 13.6% (color-color, optical+NIR), 17.3% (photo-z, optical), and 15.1% (photo-z, optical+NIR). Selection from photometric redshifts tends to give a better efficiency than color-based methods, although there is no significant improvement by adding J band data within the statistical scatter. We also investigate the main limiting factors for the success rate, by using the sample of the HiZELS Hα emitters that were selected by narrow-band imaging. Although the number density of total Hα emitters having higher Hα fluxes than the FMOS sensitivity is comparable with the FMOS fiber density, the limited accuracy of photometric redshift and Hα flux estimations have comparable effects on the success rate of <∼ 20% obtained from SED fitting.

Key words: cosmology: large-scale structure of universe — cosmology: observations — techniques: photomet- ric 1. Introduction

Recent cosmological observations, including distance measurements of Type Ia supernovae, temperature fluctuations of the Cosmic Microwave Background (CMB), and large galaxy redshift surveys, have revealed that the expansion of the Universe is accelerating. This phenonemon cannot be explained by conventional physics (see e.g., Peebles & Ratra 2003; Frieman, Turner, & Huterer 2008; Weinberg et al. 2012 for recent reviews). This acceleration may be caused by the existence of an unknown form of energy (so-called “dark energy”) coming into the energy-momentum tensor in the Einstein’s field equation. Another possibility is that the general relativity is not the correct theory of gravity on cosmological scales.

Observations of the large scale structure of the universe as traced by large spectroscopic galaxy survey are now attracting significant attention as a probe to investigate the nature of dark energy. For example, the baryon acoustic oscillation (BAO) signature found in the clustering pattern can be used as a standard ruler to measure the geometry of the universe and then to constrain the equation of state of the dark energy (Cole et al. 2005; Eisenstein et al. 2005; Blake et al. 2011b; Beutler et al. 2011; Anderson et al. 2012). Galaxy redshift surveys also provide a useful test of the gravity theory on cosmological scales (Hawkins et al. 2003; Guzzo et al. 2008; Blake et al. 2011a; Samushia et al. 2012; Reid et al. 2012; Beutler et al. 2012; de la Torre et al. 2013), because the amplitude of the redshift space distortion (RSD) induced by peculiar motions is related to the structure growth rate (Kaiser 1987; Hamilton 1998).

The FastSound project^1 is a redshift survey of Hα emitting galaxies at z ∼ 1.3, aiming at the first significant detection of RSD beyond z = 1. The survey utilizes the Fiber Multi-Object Spectrograph (FMOS, Kimura et al. 2010) on the 8.3m Subaru Telescope, which can observe 400 simultaneous near-infrared spectra from within a 30 arcmin diameter field-of-view (FoV). The survey started in March 2012, and will collect in total >∼ 5,000 galaxy redshifts in four fields with a total survey area of 30 deg^2 in two years. The main science goal is to measure the growth rate fσ_8, where f = dlnD/dlna is the evolution of the growth factor D with cosmic scale factor a and σ_8 is the total amplitude of matter fluctuations. The estimated accuracy of the RSD measurement is ∼ 15%,^2 which would give a stronger constraint on the theory of gravity than currently available from other RSD surveys at z < 1.

A key requirement for the FastSound survey design is to determine how to select the target galaxies efficiently from photometric data. To finalize the target selection method for FastSound, we carried out test observations using FMOS in September/October, 2011, where we tested several selection methods, e.g., color-based selections versus photometricredshift-based selections, and pure optical-band selections versus adding near-infrared bands. The aim of this paper is to report the results of this pilot study. Though the objective here is mainly for the FastSound project, the results will also be useful for efficient selection of emission-line galaxies or starforming galaxies at high redshifts, which can aid the design of even larger future cosmological surveys. We will also examine the factors limiting the selection efficiency by comparing our results with the statistics of emission line galaxies detected by narrow-band imaging from the HiZELS survey (Geach et al. 2008; Sobral et al. 2013).

This paper is organized as follows. In §2, we describe the photometric data used to select targets, the methods of estimating photometric redshifts and Hα fluxes, and the selection methods tested. In §3, the data reduction is presented briefly, followed by the description of the automated emission line detection method used. The main results are presented in §4, and we summarize our results in §5. Throughout this paper, all magnitudes are given in the AB system, and a standard cosmology of (Ω_m,Ω_Λ,h) = (0.3,0.7,0.7) is adopted.

2. Target Selection for FMOS Observation

2.1. Input Photometric Galaxy Catalogues for Selection

For the FastSound project, we must efficiently select target galaxies which are detectable by FMOS in an exposure time of 30 min (Hα emission line fluxes of F_{Hα} >∼ 1.0 × 10^{−16} [erg/cm^2/s] at z = 1.2–1.5) in a survey area of ∼ 30 deg^2. We adopted the Canada-France-Hawaii Telescope Legacy Survey (CFHTLS) Wide as the primary photometric data set for the target selection. We used the MAG AUTO magnitudes of u^∗, g^′, r^′, i^′, and z^′ filters of the z^′-selected

1 http://www.kusastro.kyoto-u.ac.jp/Fastsound/ 2 http://www.subarutelescope.org/Science/SACM/

Senryaku/FMOS_Cosmology_proposal.pdf

Fig. 2. Photo-z distributions of all galaxies (solid) and color-selected galaxies (dashed) of CFHTLS W1 and W4. The wavelength coverage of FastSound corresponds to z = [1.19, 1.53].

merged catalogue in the CFHTLS-Wide W1 and W4 fields generated by Gwyn (2012) for these test observations. The approximate limiting magnitudes are 26.0, 26.5, 25.9, 25.7, and 24.6 respectively (50% completeness level for point sources).

In ∼ 3 deg^2 of the CFHTLS W1 field and ∼ 7 deg^2 of the W4 field, near-infrared J band data are also available from the UKIDSS deep Extragalactic Survey (UKIDSS DXS: Lawrence et al. 2007) DR8, whose limiting magnitude is 22.3 (5σ, pointsource), and we use these data to test the usefulness of adding NIR data to the selection criteria. The Galactic extinction was corrected using the E(B − V ) maps of Schlegel et al. (1998).

2.2. Color-based Selection

The first simple method that we test is a selection by galaxy colors. We empirically determined the color selection criteria to select galaxies whose Hα fluxes are expected to be strong, based on Hα flux estimates from SED fittings and photometric redshift calculations using deep optical+NIR photometry of galaxies in the Subaru deep Field and the Subaru XMM- Newton deep Field (Sumiyoshi et al. 2009). For this observational study we test the following color selection criteria. In the case of selection using only optical photometry of CFHTLS wide, we adopt: 0.0 < (r^′ − z^′) − 1.4(g^′ − r^′) < 0.8, 0 < g^′ − r^′ < 0.6, (i^′ − z^′) − 0.6(g^′ − i^′) > −0.1. These conditions are shown in color-color diagrams of Figure 1. In addition to these color conditions, we also adopt a magnitude range of 22.0 < g^′ < 23.8, which is empirically determined from past FMOS observations.^2 In this figure the galaxies are colorcoded according to photometric redshifts described in §2.3. Approximately one third of galaxies with z_{ph} = 1.2–1.5 that we want to observe are populated in the regions of the above conditions, while more than 90% of the galaxies outside this redshift range are rejected. We varied the magnitude thresholds of z^′ in a range of z ∼ 22.6–23.0 so that ∼ 400 target galaxies

Fig. 1. CFHTLS wide galaxies on the g^′r^′z^′ and g^′i^′z diagrams. The plots are color-coded according to the photometric redshifts, as indicated in the legend. The black lines indicate the color selection criteria of 0.0 < (r^′ −z^′)−1.4(g^′ −r^′) < 0.8, 0.0 < g^′ −r^′ < 0.6, and (i^′ −z^′)−0.6(g^′ −i^′) > −0.1. Magenta lines show the color tracks of unreddened elliptical galaxies (dotted), Sbc galaxies (dashed), and Scd galaxies (solid) at 0.0 < z < 2.0. These expected colors are based on SEDs from Coleman et al. (1980).

are available for a FoV (see Table 2 for values in each field).

The photo-z distribution of color-selected galaxies is displayed in Figure 2. The distribution of all galaxies found in the primary catalog is overlaid. The distribution of selected galaxies indeed has its peak at around z ∼ 1.3, though there still remain low-redshift galaxies that would be a contamination in our target sample.

For the test of color selection using the NIR J band, we further added a condition of i^′ − J > 0.5, to account for the redshifted 4000 Å break falling between i^′ and J. However, we found that this condition was too strong to retain ∼400 targets in the FMOS FoV for the W4 field, and hence the condition was relaxed to i^′ − J > 0.0 (see §3).

2.3. Selection by Photometric Redshifts and Hα Flux Estimation

The second method we tested is based on photometric redshift estimates and Hα flux estimates from SED fitting. For galaxies brighter than i^′ = 24, the CFHTLS T0006 official photometric redshifts are available (Ilbert et al. 2006, Coupon et al. 2009), and we use these. The redshift accuracy σ_{Δz/(1+zs)} ≡ 1.48 × median(|Δz| /(1 + z_s)) is around 0.035 at i^′ < 21.5, 0.042 at 21.5 < i^′ < 22.5, and 0.070 at 22.5 < i^′ < 23.5. However, no photometric redshift estimate is provided for galaxies fainter than i^′ = 24 due to the poor reliability estimates of the photometry. Here, since we wish to increase the chance of observing z > 1 galaxies, we computed photometric redshifts for galaxies at i^′ > 24 by ourselves using the public code LePhare (Arnouts et al. 1999, Ilbert et al. 2006) according to the description of Coupon et al. (2009). When a galaxy is not detected in one of the band filters, the band was simply not used in the photo-z calculation.

Photometric zero-point calibration using galaxies with known spectroscopic redshifts is important for the accuracy of photometric redshift calculation. Since the spectroscopic data of the VVDS (VIMOS-VLT Deep Survey: Le Fèvre et al. 2005; Garilli et al. 2008)^3 deep and wide survey data are available on the area of CFHTLS W1 and W4 respectively, we used them to perform the zero-point calibration of CFHTLS wide photometry, although they are outside the redshift range of our survey. The VVDS survey depths are 17.5 ≤ I_{AB} ≤ 24.0 for VVDS deep and 17.5 ≤ I_{AB} ≤ 22.5 for VVDS wide. We used galaxies with flags of 2–4 (∼ 80–99% secure redshifts), 9 (one secure spectral feature in emission), 12–14, or 19 (similar to 2–4, 9 but flags for broad line AGNs) for both VVDS deep and wide to assure secure redshift determination. Galaxies from VVDS deep and wide public data with z^′ magnitudes brighter than 23.0 are matched with CFHTLS W1 and CFHTLS W4, respectively, and used for the derivation of photometric calibrations. The sample sizes of VVDS-CFHTLS are 5,054 (CFHTLS W1) and 8,445 (W4), and the redshift medians are 0.69 and 0.56, respectively.

These photometric redshifts are based on empirical SED templates of Ell, Sbc, Scd, Irr (CWW; Coleman et al. 1980), 60 interpolated SEDs from CWW, and two starbursts from Kinney et al. (1996). Hα fluxes cannot be estimated simply from these results, because the empirical templates do not include any details on the physical galaxy properties such as stellar mass or star formation rate. Therefore we further performed fitting with theoretical SED templates from PEGASE2 (Fioc & Rocca-Volmerange 1997), Scalo IMF (Scalo 1986) and solar abundance, fixing the redshifts at those estimated using the empirical SED templates. We use 13 models of exponentially declining star formation histories with the exponential time

3 http://cesam.oamp.fr/vvdspub/

scales ranging 0.1–20 Gyr, and a constant SFR model. The dust extinction is taken into account assuming the Calzetti law (Calzetti et al. 2000) in the range of E(B −V ) = 0–0.35. Then we calculate the intrinsic Hα flux from SFR by the conversion factor which is based on Kennicutt (1998) and of which the offset is calibrated using SDSS galaxies (Brinchmann et al. 2004, Sumiyoshi et al. 2009). Finally, the observable Hα flux is calculated taking into account extinction using the E(B − V ) value obtained from the SED fit. Here, we followed the prescription of Cid Fernandes et al. (2005) to take into account that the extinction of Hα flux (from hot ionized gas region) is generally higher than that of stellar radiation estimated from SED fittings.

For the photo-z selection using optical bands, first we selected target galaxies at 1.18 < z_{ph} < 1.54, z^′ < 23.0 and g^′ − r^′ < 0.7. The constraints on z^′ magnitude and color are added empirically, since we learned from the past FMOS observations that bluer galaxies have higher probability of detectable emission lines, and that galaxies fainter than z^′ = 23 are not usually detected at our survey limits. The dependence of the selection efficiency on the g^′ − r^′ threshold will be discussed in §4.1.

Then we select galaxies with bright estimated Hα fluxes, with a flux threshold determined to keep ∼ 400 target galaxies for one FMOS field. The typical threshold flux is ∼ 0.75 × 10^{−16} [erg/cm^2/s] (see Table 2 for the values in each field).

In the case of photo-z selection using NIR J band, we repeated the same procedures as above, except that we calculated photo-z’s for all the galaxies because the CFHTLS official photometric redshifts are based only on the optical bands. It should be noted that only about 70% of all the CFHTLS Wide galaxies are detected in the UKIDSS J band, and the fraction in the galaxies selected as the FMOS target is also similar. Photo-z’s of the galaxies not detected in J are calculated only with the optical bands, and this may limit the improvement of the line detection rate by adding a NIR band. We will also test the effect of including the K band on the target selection efficiency in §4.1.

Finally, it should also be noted that our target selection does not include particular conditions to remove AGNs. Therefore we expect a contamination of AGNs in our sample, but examination of line widths of detected galaxies by our FMOS observation indicates that the fraction is not large.

3. FMOS Observation

We observed four FMOS fields for each of CFHTLS W1 (hereafter we call them W1 001–004) and W4 (W4 001–004). The four different combinations of the used photometric bands (optical only or optical+NIR) and selection methods (color or photometric redshift) are applied to the four fields in each of the two CFHTLS wide fields. The field locations and corresponding selection parameters are summarized in Table 1.

3.1. Observation and Data Reduction

The observations were carried out with Subaru/FMOS on the nights of September 22–25^{th}, 2011. We used the normal beam-switching mode (NBS mode) of FMOS, with the total exposure time of 90 min in one FoV for each of the object and sky frames. In the NBS mode, the object frame is taken using all 400 fibers for targets, followed by the sky frame. We chose this mode because the fiber allocation is geometrically less complicated than the cross beam switching (CBS), where 400 fibers are split into 200 targets and 200 sky regions, and sky subtraction is done by another frame exchanging target and sky fibers.^4

FMOS has two different spectral resolution modes, and the FastSound project uses the high-resolution (HR) mode (R ∼ 2200) since the throughput in HR mode is higher than in the low-resolultion (LR) mode by a factor of about two due to loses in the low resolution (LR) mode arising from the additional Volume-Phase Holographic grating used to decrease spectral resolution (Tamura et al. 2012). However, in this observing run, the HR mode was not available for IRS1 due to a mechanism failure, and hence the IRS1 observation was done with the LR mode covering 0.9 μm–1.8 μm (R ∼ 500). For this reason, we only present the results from IRS2 in this paper, i.e., ∼ 200 galaxies in one FoV. The exposure time was set to be three times longer than that for FastSound project, because the background of IRS2 was ∼ 2 times higher than usual.

For IRS2, the wavelength coverage of the HR mode was set to be at the blue-end of H band, 1.44 μm–1.66 μm (corresponding to Hα at z = 1.19–1.53), and the pixel scale was 1.07 [Å/pix]. This range was chosen to be optimal, considering the balance between the maximal scientific value of FastSound (i.e., higher redshifts) and a sufficient number of emission line galaxies detectable by FMOS, based on the results of previous preliminary observations. The obtained data were reduced with the FMOS data reduction pipeline (FIBRE-pac: Iwamuro et al. 2012).

3.2. Emission Line Detection

Emission lines were searched for by automated emission line detection software developed by the FastSound group (Tonegawa et al. 2013, in preparation), and here we briefly summarize the software algorithm. First we subtract the continuum component from each spectrum in 2D images by polynomial fits. Then the 2D images of the spectra are convolved with 2D Gaussian kernel, with standard deviations of σ_x = 4.26 [pix] in the wavelength direction (corresponding to a quadratic sum of the FMOS HR mode resolution and a typical velocity dispersion 175 km/s FWHM of Hα lines detected by FMOS at z ∼ 1.3) and σ_y = 2.5 [pix] for the direction perpendicular to wavelength (corresponding to the instrumental image quality). The line flux is calculated by fitting the kernel shape, and corresponding statistical noise is also calculated from the noise map produced by FIBRE-pac. A key feature is that we artificially amplify the noise level in the regions corresponding to the OH-suppression masks to effectively reduce the signal-to-noise (S/N) ratio of the OH-airglow emission regions, where the large scatter of S/N causes false detections.

The algorithm then searches for local S/N peaks along the wavelength direction, and selects the local peaks having S/N values larger than a given threshold as the emission line candidates. Finally, spurious detections are removed by using in-

4 http://www.naoj.org/Observing/Instruments/FMOS/

Table 1. The positions of the FMOS field centers, selection methods, and Galactic extinction values for our observations.

Field RA(J2000) DEC(J2000) selection band mean E(B-V) W1 001 02:25:51.85 −04:27:00.0 color optical 0.026 W1 002 02:27:35.77 −04:27:00.0 color optical+NIR 0.027 W1 003 02:05:10.00 −04:49:30.0 photo-z optical 0.027 W1 004 02:26:44.00 −04:49:30.0 photo-z optical+NIR 0.027 W4 001 22:14:03.96 +01:40:30.0 color optical 0.038 W4 002 22:14:55.92 +01:18:00.0 color optical+NIR 0.041 W4 003 22:15:54.00 +01:40:30.0 photo-z optical 0.044 W4 004 22:16:40.00 +01:18:00.0 photo-z optical+NIR 0.046

formation from the bad pixel and noise maps. We examined the performance of the line detection software by applying it to the inverted image produced by exchanging the object and sky frames, where all the detections must be spurious. We find that practically all emission lines are real above the threshold value of S/N > 4.5 that was adopted in the sample presented in this work. (Details will be reported in Tonegawa et al. 2013, in preparation.) Examples of emission line candidates detected by the software are shown in Figure 3.

Since Hα is the strongest line in star-forming galaxies in the interested wavelength, the majority (>∼ 90%) of the detected emission lines are expected to be Hα (Glazebrook et al. 2004, Yabe et al. 2012). In the following we present the success rate of emission line detection, without discriminating between Hα and other lines. We will discuss the contamination fraction of other lines later in §4.3 using the HiZELS sample.

We measure redshifts and Hα fluxes by fitting a Gaussian profile. The effect of fiber losses are estimated from the relation between the covering fraction (of light falling within the 1.2^{′′} diameter fiber aperture) and half-light radius of galaxies used in Yabe et al. (2012). This estimate was made for FMOS fields in which the NIR data was available (i.e., W1 002, W1 004, W4 002, W4 004), and the half-light radius was estimated from the intrinsic radius of UKIDSS DXS galaxies in J-band filter and the typical seeing size of our observation (0.65^{′′} for W1 and 0.8^{′′} for W4, FWHM). The intrinsic radius was estimated by subtracting WFCAM seeing (0.8^{′′} FWHM) from the observed size (mean of the major and minor axis sizes) in quadrature. The median of covering fraction are 0.48 for W1 and 0.46 for W4, respectively, and all line fluxes of detected objects are uniformly corrected by these values.

4. Results and Discussion

4.1. Statistics of Line Detection

The statistic that we are primarily interested in is the emission line detection rate among the galaxies observed by FMOS (hereafter the ”success rate” or ”SR”), for various selection methods. This statistics is summarized in Table 2 for each of eight FMOS FoVs observed. The typical success rate is ∼ 10– 20%, and a general tendency of higher detection rate by the photo-z selections, relative to the color selections, can be seen. On the other hand, we can see no clear increase of the success rate, within the statistical uncertainties, due to adding NIR data. An increase of the success rate with added NIR data can be seen for the case of color selection in the W1 field, but it cannot be seen in the W4 field or in the cases of photo-z selections. It was expected that NIR data would be useful because of the inclusion of redshifted 4000Å breaks in photo-z calculations, but this effect may not be large for blue, star-forming galaxies having rather weak breaks.

The thresholds of z^′ < 22.6 (color selection) or F_{Hα,est} (photo-z selection) are different for different fields, to keep ∼400 objects in each FMOS FoV. In order to examine whether the lower success rate (such as W4 002) is a result of a fainter z^′ mag or F_{Hα,est} threshold in a field, we limit the statistics by taking the tightest ones of z^′ < 22.65 or F_{Hα,est} > 0.85 × 10^{−16} [erg/cm^2/s] uniformly for all fields, which is also summerized in Table 2. The success rates are almost unchanged, showing that the lower success rates are not caused by taking fainter targets. Also, even if we limit the i^′ −J condition of W4 002 (i^′ − J > 0.0) to that of W1 002 (i^′ − J > 0.5), the success rate of W4 002 remains constant (11/119 = 9.2%). A more strict color selection of g^′ − r^′ < 0.5 instead of g^′ − r^′ < 0.7 for the photo-z selections increases the overall success rate from 16.7% to 19.1%, though the target number density drops to ∼ 290 per FoV.

We tested whether the success rate increases when K-band data are included. All of the fields of W1 004 and W4 004 (NIR, photo-z selection) are covered also by the K band, and about 60% of CFHTLS Wide galaxies are detected both in the J and K band. We then repeated the same target selection procedures given by §2.3 but with the K band newly added. Note that a complete test of adding K is impossible because the FMOS observation is not available for galaxies that were not selected as targets by the u^′g^′r^′i^′z^′J photo-z selection, though some of them would have been selected if we used also the K band. Therefore we simply examine the line detection rate in the FMOS-observed galaxies that are also selected by the criteria including K. The success rate averaged over the W1 and W4 fields then changes from 15.2% to 15.6%, i.e., almost no improvement. It should be noted that these statistics are based on all the FMOS-observed targets including those undetected in J or K. If we examine the galaxies detected in NIR bands, the success rate becomes 16.7% (optical+J selection, detected in J) and 20.1% (optical+JK selection, detected both in J and K), and hence we see a modest improvement.

4.2. Spectroscopic versus photometric estimates of redshift and Hα flux

The observed spectroscopic redshifts are compared with photometric redshifts in Figure 4. For comparison, the VVDS

Fig. 3. Examples of 2D images (at the top-end of each panel) and 1D spectra (main figures of each panel) of four emission line candidates with different S/N values. Gray vertical stripes indicate the positions of OH-airglow suppression mask. Green lines show the noise level, multiplied by a factor of 5 for presentation purposes. These objects were examined by eye and judged to be the correct identifications for these objects, with the exception of the lowest S/N object in the lower right panel, which was rejected.

data used for the photometric calibration of the redshift estimation are also plotted in gray dots. σ_{Δz/(1+zs)} for galaxies observed by FMOS is larger (∼ 0.8) than that for VVDS galaxies (∼ 0.6). Note that σ_{Δz/(1+zs)} for FMOS galaxies is underestimated due to the selection effect (i.e., we select target galaxies within the limited range of z_{ph}). It should be noted that in our samples, adding NIR data does not improve the redshift estimation nor decrease the number of outliers, as discussed above. A comparison between the line S/N and the observed Hα flux is displayed in Figure 5. The Hα flux corresponding to S/N ∼ 5 is ∼ 1.0 × 10^{−16} [erg/cm^2/s].

The observed Hα flux versus the estimated Hα flux from

SED fittings is shown in Figure 6, which shows a large scatter between the observed and estimated Hα fluxes. We examined the effects of fiber loss variations for individual galaxy sizes (∼ 50%) and by the positional error of fiber allocation (typically less than 10%, Yabe et al. 2012), and found that these are not large enough to account for the scatter. Therefore this is most likely to be caused by the uncertainties in the photometric Hα flux estimates. The observed fluxes tends to be larger than that of estimated fluxes, especially for those having large observed fluxes. This is likely because of the selection effect around the FMOS detection limit; most of galaxies are around the selection threshold of the estimated flux, and some of them

Table 2. Success rate statistics in each FoV. See §2 for the detailed criteria. (Note that the i^′ − J condition is different for W1 002 and W4 002.) In addition to our baseline statistics with variable z^′ or F_{Hα,est} thresholds to keep ∼400 targets in one field, we also show the supplementary statistics when the uniform thresholds are adopted to all the fields. The error bars on success rates are based on Poission statistics.

FoV Method Band Target Emitters SR (%) z^′ threshold F_{Hα,est} threshold [erg/cm^2 /s] all observed objects W1 001 color opt 179 20 11.2 ± 2.5 22.65 – W1 002 color opt+NIR 178 32 18.0 ± 3.2 22.90 – W1 003 photo-z opt 171 29 17.0 ± 3.1 22.90 – W1 004 photo-z opt+NIR 172 27 15.7 ± 3.0 23.05 – W4 001 color opt 174 20 11.5 ± 2.6 – 0.85 × 10^{−16} W4 002 color opt+NIR 174 16 9.2 ± 2.3 – 0.80 × 10^{−16} W4 003 photo-z opt 181 32 17.7 ± 3.1 – 0.75 × 10^{−16} W4 004 photo-z opt+NIR 164 24 14.6 ± 3.0 – 0.65 × 10^{−16} uniform threshold of z^′ < 22.65 (for color-selection) W1 001 color opt 179 20 11.2 ± 2.5 22.65 – W1 002 color opt+NIR 123 22 17.9 ± 2.6 22.65 – W4 001 color opt 171 29 17.0 ± 3.1 22.65 – W4 002 color opt+NIR 161 25 15.5 ± 2.9 22.65 – uniform threshold of F_{Hα,est} > 0.85 × 10^{−16} [erg/cm^2/s] (for photoz-selection) W1 003 photo-z opt 116 15 12.9 ± 2.2 – 0.85 × 10^{−16} W1 004 photo-z opt+NIR 90 9 10.0 ± 1.7 – 0.85 × 10^{−16} W4 003 photo-z opt 173 31 17.9 ± 3.1 – 0.85 × 10^{−16} W4 004 photo-z opt+NIR 134 20 14.9 ± 2.7 – 0.85 × 10^{−16}

having large observed fluxes have high probabilies of being detected.

In right panels of Figure 6 we also plot the Hα fluxes estimated by fixing redshifts in the SED fitting at the measured spectroscopic values, rather than at the photometric redshifts. There is still a large scatter, indicating that the theoretical SED fitting has a large uncertainty, even if we use the correct redshifts. Note that we are observing in a relatively narrow redshift range with FMOS for Hα (z = 1.19–1.53), and the selected targets have photo-z values in z = 1.18–1.54. Therefore photo-z and spec-z cannot differ by large factors, and the lack of significant improvement from using spec-z should not be surprising.

4.3. Comparison with the HiZELS Data

Here we examine our selection processes, with the aim of determining which of the processes are mainly limiting the success rate of emission line detection. We use data for emission line galaxies detected by the NBH narrow-band filter of the High Redshift(Z) Emission Line Survey (HiZELS: Geach et al. 2008; Sobral et al. 2009), corresponding to Hα at z = 1.47. Although the redshift interval corresponding to the narrow band filter is small (z = 1.466 ± 0.016), the redshift is within the FastSound spectroscopic coverage, and all the Hα emitter brighter than the detection limit are included in the HiZELS sample. Therefore we can estimate how many Hα emitters are missed by considering the effects of the FastSound target selection criteria for the HiZELS galaxies. Note that this is entirely a calculation and we do not have FMOS observations of HiZELS targets.

We use the HiZELS catalogue in a 0.63 deg^2 region where the UKIDSS UDS, SXDS, and CFHTLS W1 data are available, since the color and photo-z information from SXDS and the HiZELS NB921 narrow-band imaging data in SXDS are crucial to classify HiZELS NBH emitters into Hα and others (Sobral et al. 2013). There are 192 NBH emitters having coun-

Fig. 5. The signal-to-noise ratio of emission line detection plotted against the observed Hα line fluxes. The observed fluxes are corrected for the effects of fiber aperture loss.

terparts in the SXDS and CFHTLS W1 catalogues, while there are 56,576 galaxies in the same region in the CFHTLS wide catalogue. The NBH line flux limit is 7.0 × 10^{−17} [erg/cm^2/s] (3σ), which is close to the FMOS line detection limit.

Among the 192 objects, 114 objects are identified to be Hα emitters at z ∼ 1.47 by the [OII]+Hα double-line selection using the HiZELS NB921 and HiZELS NBH data. Since the NB921 observation is deep enough to detect galaxies with small emission line ratios of [OII]/Hα ∼ 0.08, more than 98% of Hα emitters can be selected by this criteria (Sobral et al. 2012). Considering the FMOS redshift coverage (OH mask regions removed) that is 8.6 times wider than the HiZELS NBH

Fig. 4. Comparison between spectroscopic and photometric redshifts for galaxies with detected emission lines (red circles) in the fields using the photo-z selection (W1 003 and 004, and W4 003 and 004). VVDS galaxies are also plotted for comparison. σ is the redshift accuracy calculated by 1.48 × median(|Δz| /(1 + z_s)).

width and the area of FMOS FoV (0.19 deg^2), we expect 292 Hα emitters per FMOS FoV, which is close to the number of FMOS fibers, indicating that we need an almost perfect target selection method in order to achieve ∼100% line detection efficiency.

NBH emitting objects that were not detected in NB921 should be emission lines other than Hα, and these are useful to estimate the contamination rate of non-Hα emitters in the target selection of FastSound. Here we classify these into the following two categories. One is the non-Hα lines that are close to Hα, such as [NII] (6548,6583) and [SII] (6716,6731). Although Hα emissions of these objects are outside the NBH filter window, the redshift is almost the same as Hα emitters, and hence they can be detected as Hα emitters by FastSound.

Therefore these should not be included in the contamination rate estimate. Note that we do not have to count these as Hα emitters either, since this population should be effectively included in the above expected number of 375 Hα emitters in the FastSound redshift range. The other category is the lines whose redshifts are completely different, such as Hβ(4861), [OIII] (4959, 5007), and [SIII] (9069, 9532), which would cause a redshift mis-identification and lead to a systematic error in fσ_8.

We classify the non-Hα objects into these two categories accodring to whether they satisfy photo-z and color selection criteria for Hα identification of the NBH emitters adopted by the HiZELS team (Sobral et al. 2013). Since the color/photo-z criteria does not discriminate between Hα and the close lines, the objects without NB921 emission but satisfying color/photo-z

Fig. 6. Comparison between the observed Hα fluxes from FMOS and the fluxes estimated from photometric SED fitting. Only galaxies in the FMOS fields with photo-z selection (W1 003, 004, W4 003, 004) are shown. The observed fluxes are corrected for the effect of fiber aperture loss (see §3.1). The photometric Hα flux estimates were made using optical bands (top panels) or optical+NIR bands (bottom panels). In the left panels, redshifts are fixed at those estimated using SED fits to empirical SED templates, while in the right panels the redshifts were fixed at those determined spectroscopically. A typical error size along the x-axis by the fiber aperture loss (see §3.2) is shown in the upper-left corner, and the flux level corresponding to S/N = 5 is also shown. The y-axis errors are 1σ statistical errors derived by the LePhare code.

criteria are considered to be the former category. There are 24 and 54 objects in the two categories, respectively, and we use only the latter for the non-Hα contamination rate estimate for FastSound. Note that the actual contamination rate may be smaller than this estimate, because we can identify Hβ(4861)+[OIII] (4959, 5007) double-emitters and remove them in the actural FMOS spectra. 4.3.1. Color-based Selection

We first examine the color selection described in §2.2 using optical data, i.e., (1a) the g^′r^′i^′z^′ color conditions, (2a) the g^′ magnitude condition, and (3a) the z^′ magnitude condition. Here we adopt the z^′ magnitude threshold of z^′ < 23.0, so that there are ∼ 400 target galaxies in one FMOS field. After adopting the selection criteria, 1,100 target galaxies remain in the region of the HiZELS data set, and there are 17 HiZELS Hα emitters and 1 non-Hα object. This means an Hα detection rate of 13.3% if the redshift range is scaled to that of FMOS (8.6 times larger), which is roughly consistent with the actual FMOS observation reported in §4.1. In table 3, we also show the change of galaxy numbers by adopting the each step of the target selection of (1a)–(3a). The success rate (i.e., the number of Hα emitters in selected galaxies) increases by a factor of two using the color condition and three using magnitude conditions, indicating that conditions of color and magnitude are

Table 3. The statistics of HiZELS and CFHTLS galaxies after selection using optical colors described in §4.3.1. The numbers in parentheses are scaled to the expected number in one FMOS field (0.19deg^2 ) and in the FastSound redshift coverage (z =1.19–1.53).

Selection HiZELS Hα HiZELS non-Hα CFHTLS Success Rate without selection 114 (375) 54 (178) 56,576 (17,063) 1.7% 1a (color) 21 (69) 7 (23) 4,742 (1,430) 3.8% 2a (1a + g^′ mag) 18 (59) 2 (6.6) 1,179 (356) 13.1% 3a (2a + z^′ mag) 17 (55) 1 (3.3) 1,100 (332) 13.3%

Table 4. The same as Table 3, but for the case of optical photo-z selection described in §4.3.2.

Selection HiZELS Hα HiZELS non-Hα CFHTLS Success Rate without selection 114 (375) 54 (178) 56,576 (17,063) 1.7% 1b (z_{ph}) 42 (138) 11 (36) 11,993 (3,560) 3.0% 2b (1b + Hα flux) 22 (72) 4 (13) 1,943 (586) 9.7% 3b (2b + g^′ − r^′ color) 21 (69) 4 (13) 1,599 (482) 11.3% 4b (3b + z^′ magnitude) 16 (53) 4 (13) 1,428 (431) 9.6%

comparably important.

There is only one non-Hα emitter in the final targets selected, indicating that the contamination of non-Hα in emission lines of color selection is less than 10%, although the statistical uncertainty is large.

4.3.2. Photoz-based Selection

Next we examine the optical photo-z-based selection, i.e., the conditions on (1b) photometric redshift, (2b) estimated Hα flux, (3b) g^′ − r^′ color, and (4b) z^′ magnitude. For this region we set F_{Hα, est} threshold to be 1.0×10^{−16} [erg/cm^2/s] to have an appropriate number of targets (∼ 400) in one FMOS field. After these conditions have been adopted, 1,428 CFHTLS galaxies and 16 HiZELS Hα emitters are selected, yielding a success rate of 9.6% scaled into the FastSound redshift range, which is again roughly consistent with the FMOS observations. The change of the success rate by the each step of the selection (1b)–(4b) is also shown in Table 4. This result indicates that the most efficient selection process is obtained by adopting the Hα threshold, followed by the selection using photometric redshifts. The empirically introduced conditions of (g^′ − r^′) color and z^′ magnitude are not very important at least for this sample.

The distribution of photometric redshifts and photo-z based estimates of Hα fluxes for HiZELS Hα emitters are displayed in Figure 7, in comparison with those for general CFHTLS galaxies. It is indeed seen that the fraction of HiZELS Hα emitters in general CFHTLS galaxies increases by choosing galaxies at z_{ph} ∼ 1.5 and with strong estimated Hα fluxes. However, considerable fraction of HiZELS Hα emitters are rejected by the adopted selection criteria, because of the uncertainties in the estimated redshifts and Hα fluxes of HiZELS Hα emitters which are at z = 1.47 and brighter than F_{Hα} ∼ 0.7 × 10^{−16} [erg/cm^2/s]), as seen in §7. The accuracy of redshift estimation against the correct value (i.e., z = 1.47) is σ_{Δz/(1+1.47)} ∼ 0.13, which is ∼ 2 times worse than those reported for CFHTLS galaxies (Ilbert et al. 2006; Coupon et al. 2009; see also §2.3). This is because the objects at z ∼ 1.47 are faint (i^′ > 22.0) in the CFHTLS wide catalogue, and because the accuracy is generally worse for blue (Hα emitting) galaxies than for red galaxies.

The number of non-Hα emitters in the final selected targets is relatively high: 4 against 16 Hα emitters, implying a contamination rate of 20% that is considerably higher than that for the color selection in the previous section. However, by examining the colors of the four non-Hα objects, we found that three of them are close to the border between Hα and non-Hα of the HiZELS criteria in the color diagrams, and furthermore we can remove Hβ(4861)+[OIII] (4959,5007) double-emitters using FMOS spectra, hence the actual contamination may be reduced. A statistically larger sample is required to investigate this issue more quantitatively.

5. Conclusion

In this work we examined several methods to efficiently select Hα emitting galaxies at z ∼ 1.2–1.5 from existing photometric data in a field of square-degree scales, using near-infrared spectroscopic observations from Subaru/FMOS. Although quantitatively this work considers the particular case of the FastSound project (a near-infrared galaxy redshift survey with FMOS), selecting emission line galaxies efficiently at high redshifts is important for future high-precision cosmological surveys that are now widely being discussed.

The main photometric data set that we used is the CFHTLS wide survey, where u^∗g^′r^′i^′z^′ photometric data are available in four independent fields, over a total of 155 deg^2. In order to test the gain from adding near-infrared data, we also added J-band data from the UKIDSS/DXS survey. We tested two methods of target galaxy selection: one is based on color-color diagrams, and the other is based on photometric estimates of redshifts and Hα fluxes from SED fitting methods. Therefore we tested four types of target selections, by combination of (1) color or photo-z selections and (2) using optical data only or optical plus NIR J band. Eight FMOS fields were observed, corresponding to the four types of target selection in each of the two fields of CFHTLS W1 and W4.

Emission lines are searched for by an automatic detection software from the reduced spectra, and we calculated the success rates of emission line detection (S/N > 4.5) in galaxies

No. ] A Study of Selection Methods for Hα Emitting Galaxies at z ∼ 1.3 11

Fig. 7. The distribution of photometric redshifts and photo-z based estimates of Hα fluxes, for the HiZELS galaxies identified as Hα emitters at z = 1.47 (Hα fluxes brighter than 7.0 × 10^{−17} [erg/cm^2/s]) and general CFHTLS galaxies. The number of HiZELS galaxies is multiplied by 8.6 to convert into the expected number in the FastSound redshift range. The actual Hα fluxes measured by the HiZELS NBH band data are also shown by green blocks.

observed by FMOS. The results are: 11.2% (color, opt), 18.0% (color, opt+NIR), 17.0% (photo-z, opt), and 15.7% (photoz, opt+NIR) for CFHTLS W1, and 11.5% (color, opt), 9.2% (color, opt+NIR), 17.7% (photo-z, opt), and 14.6% (photo-z, opt+NIR) for CFHTLS W4 (summarized in Table 2). Though the sample size is not large enough for robust statistics, we find a tendency for higher success rates by using photo-z (15–20%), relative to color selections (∼ 10%). Adding NIR J data does not appear to significantly improve the success rate.

We also examined the target selection methods using the HiZELS NBH narrow-band galaxy survey catalogue that corresponds to Hα at z = 1.47. We classified HiZELS sources into Hα and non-Hα lines, and then applied our target selections to them, in order to clarify what is the main factor limiting the success rate, and how many non-Hα lines are included as a contamination in the FMOS-detected emission lines. We found that in the photo-z selection, both the uncertainties of photo-z and estimated Hα flux are contributing to the relatively low success rate.

We would like to thank David Sobral, Philip Best, Ian Smail, and HiZELS team for providing us with the data obtained by the HiZELS project. This work is based on data collected at Subaru Telescope, which is operated by the National Astronomical Observatory of Japan. This work was supported by JSPS KAKENHI Grant Numbers 20040005, 22012005, and 23684007.

References

Anderson, L., et al. 2012, MNRAS, 427, 3435 Arnouts, S., Cristiani, S., Moscardini, L., Matarrese, S., Lucchin, F.,

Fontana, A. & Giallongo, E. 1999, MNRAS, 310, 540 Beutler, F., et al. 2011, MNRAS, 416, 3017 Beutler, F., et al. 2012, MNRAS, 423, 3430

Blake, C., et al. 2011, MNRAS, 415, 2876 Blake, C., et al. 2011, MNRAS, 415, 2892 Brinchmann, J., Charlot, S., White, S. D. M., et al. 2004, MNRAS, 351, 1151 Calzetti, D., Armus, L., Bohlin, R. C., Kinney, A. L., Koornneef, J. & Storchi-Bergmann, T. 2000, ApJ, 533, 682 Cid Fernandes, R., Mateus, A., Sodré, L., Stasińska, G. & Gomes, J. M. 2005, MNRAS, 358, 363 Cole, S., et al. 2005, MNRAS, 362, 505 Coleman, G. D., Wu, C.-C., Weedman, D. W. 1980, ApJS, 43, 393 Coupon, J, et al. 2009, A&A, 500, 981 de la Torre, S., et al. 2013, arXiv:1303.2622 Eisenstein, D. J., et al. 2005, ApJ, 633, 560 Fioc, M., & Rocca-Volmerange, B. 1997, A&A, 326, 950 Frieman, J. A., Turner. M. S. & Huterer, D. 2008, ARA&A, 46, 385 Garilli, B., et al. 2008, A&A, 486, 683 Geach, J. E., Smail, I., Best, P. N., Kurk, J., Casali, M., Ivison, R. J.

& Coppin, K. 2008, MNRAS, 388, 1473 Glazebrook, K., Tober, J., Thomson, S., Bland-Hawthorn, J., & Abraham, R. 2004, AJ, 128, 2652 Guzzo, L., et al. 2008, Nature, 451, 541 Gwyn, S. D. J 2012, A&A, 143, 38 Hamilton, A. J. S. 1998, The Evolving Universe, 231, 185 Hawkins, E., et al. 2003, MNRAS, 346, 78 Ilbert, O., et al. 2006, A&A, 457, 841 Iwamuro, F. 2012, PASJ, 64, 59 Kaiser, N. 1987, MNRAS, 227, 1 Kennicutt, R. C., Jr. 1998, ARA&A, 36, 189 Kimura, M. et al. 2010, PASJ, 62, 1135 Kinney, A. L., Calzetti, D., Bohlin, R. C., McQuade, K., Strochi- Bergmann, T. & Schmitt, H. R. 1996, ApJ, 467, 38 Lawrence, A., et al. 2007, MNRAS, 379, 1599 Le Fèvre, O., et al. 2005, A&A, 439, 845 Peebles, P. J. & Ratra, B. 2003, RvMP, 75, 559 Reid, B. A., et al. 2012, MNRAS, 426, 2719 Scalo. J. M. 1986, FCPh, 11, 1 Sumiyoshi, M. et al. 2009, arXiv:0902.2064

12 Astronomical Society of Japan [Vol. ,

Samushia, L, Percival, W. J & Raccanelli, A 2013, MNRAS, 420,

2102 Schlegel, D. J., Finkbeiner, D. P & Davis, M. 1998, ApJ, 500, 525 Sobral, D., Best, P. N., Geach, J. E., Smail, I, Kurk, J., Cirasuolo, M.,

Casali, M., Ivison, R. J., Coppin, K. & Dalton, G. B. 2009, MNRAS, 398, 75 Sobral, D., Best, P. N., Matsuda, Y., Smail, I., Geach, J. E. &

Cirasuolo, M 2012, MNRAS, 420, 1926 Sobral, D., Smail, I., Best, P. N., Geach, J. E., Matsuda, Y., Scott, J. P.,

Cirasuolo, M. & Kurk, J. 2013, MNRAS, 428, 1128 Tamura, N., et al. 2012, Proceedings of SPIE, 8446 Weinberg, D. H., Mortonson, M. J., Eisenstein, D. J., Hirata, C., Riess,

A. G. & Rozo, E 2012, arXiv1201.2434 Yabe, K., et al. 2012, PASJ, 64, 60