arXiv:1402.6534v1 [astro-ph.EP] 26 Feb 2014

Revision 8.0 — Friday 2^{nd} February, 2018— 21:38

Validation of Kepler’s Multiple Planet Candidates. III: Light Curve Analysis & Announcement of Hundreds of New Multi-planet Systems

Jason F. Rowe,^{1,2} Stephen T. Bryson,^1 Geoffrey W. Marcy,^3 Jack J. Lissauer,^1 Daniel Jontof-Hutter,^{1,4} Fergal Mullally,^{1,2} Ronald L. Gilliland,^5 Howard Issacson,^3 Eric Ford,^6 Steve B. Howell,^1 William J. Borucki,^1 Michael Haas^1, Daniel Huber,^{1,4} Jason H. Steffen,^{7,8} Susan E. Thompson,^{1,2} Elisa Quintana,^{1,2} Thomas Barclay,^{1,9} Martin Still,^{1,9} Jonathan Fortney,^{10} T. N. Gautier III,^{11} Roger Hunter,^1 Douglas A. Caldwell,^{1,2} David R. Ciardi^{12} Edna Devore,^2 William Cochran,^{13} Jon Jenkins,^{1,2} Eric Agol,^{14} Joshua A. Carter,^{15} John Geary,^{15}

Jason.Rowe@nasa.gov

ABSTRACT

1NASA Ames Research Center, Moffett Field, CA 94035 2SETI Institute, Mountain View, CA 94043 3University of California, Berkeley, CA, 94720 4NASA Postdoctoral Program 5Center for Exoplanets and Habitable Worlds, The Pennsylvania State University, University Park, PA, 16802, USA

6Pennsylvania State University, PA 16801 7Northwestern University, Department of Physics & Astronomy/CIERA, 2145 Sheridan Road, Evanston, IL 60208

8Lindheimer Fellow 9Bay Area Environmental Research Inst., 596 1st St West, Sonoma, CA 95476 10Department of Astronomy and Astrophysics, University of California, Santa Cruz, CA 95064 11Jet Propulsion Laboratory, California Institute of Technology 12NASA Exoplanet Science Institute/Caltech 13Department of Astronomy and McDonald Observatory, The University of Texas at Austin 14Department of Astronomy, Box 351580, University of Washington, Seattle, WA 98195, USA 15Harvard-Smithsonian Center for Astrophysics, 60 Garden St., Cambridge, MA 02138

– 2 –

The Kepler mission has discovered over 2500 exoplanet candidates in the first two years of spacecraft data, with approximately 40% of them in candidate multi-planet systems. The high rate of multiplicity combined with the low rate of identified false-positives indicates that the multiplanet systems contain very few false-positive signals due to other systems not gravitationally bound to the target star (Lissauer, J. J., et al., 2012, ApJ 750, 131). False positives in the multiplanet systems are identified and removed, leaving behind a residual population of candidate multi-planet transiting systems expected to have a false-positive rate less than 1%. We present a sample of 340 planetary systems that contain 851 planets that are validated to substantially better than the 99% confidence level; the vast majority of these have not been previously verified as planets. We expect ∼2 unidentified false-positives making our sample of planet very reliable. We present fundamental planetary properties of our sample based on a comprehensive analysis of Kepler light curves and ground-based spectroscopy and high-resolution imaging. Since we do not require spectroscopy or high-resolution imaging for validation, some of our derived parameters for a planetary system may be systematically incorrect due to dilution from light due to additional stars in the photometric aperture. None the less, our result nearly doubles the number of verified exoplanets.

Subject headings: planets: Kepler-100, Kepler-101,..., Kepler-421 — Facilities: The Kepler Mission.

1. Introduction

Data from the first two years of Kepler spacecraft operations have identified 3670 target stars with periodic or transit-like signatures indicative of transiting planets or eclipsing binary stars. Approximately 50% of these targets have signatures that can be attributed to false-positives (FPs), primarily eclipsing binaries (EBs) centered on the target star, a chance alignment of a distant EB within the photometric aperture, or flux bleeds into the photometric aperture. The remaining 2530 systems are composed of primarily exoplanetary systems with an expected FP rate of approximately 10% due to photometric blends (Morton & Johnson 2011; Fressin et al. 2013; Santerne et al. 2013). However, a subset of 457 systems show more than one candidate transiting planet candidate (PC); we refer to these candidates as “multis”. FPs should be nearly randomly distributed among Kepler targets, whereas if flat multi-planet systems are common, then many targets should have multiple transiting planets (Lissauer et al. 2011). The large number of multis observed thus

– 3 –

implies a high reliability rate, as quantified by (Lissauer et al. 2012, 2013; henceforth Paper I and Paper II, respectively). The small number of FPs found in multis observed by Kepler (Latham et al. 2011, and §5.9 of this paper) reinforces our confidence in the high reliability of the PCs remaining in multis (see Appendix C of Paper II for details). After making selections to minimize the odds of blend scenarios, we find 340 systems containing a total of 851 planets that can be validated to better than the 99 percentile, with 768 planets across 306 systems being newly validated. Some of these systems have also been confirmed from radial velocity detection (Marcy et al. 2013; Gautier et al. 2012), transit timing variations (Ford et al. 2011; Steffen et al. 2012) and planet validation techniques such as BLENDER (Torres et al. 2011; Fressin et al. 2012) and now through multiplicity boost (Paper I). We increase the known number of exoplanets from 942^1 to 1710.

With excellent precision and high-duty cycle, Kepler observations of transiting exoplanet systems provide photometric data that can be used to measure fundamental transit properties such as transit duration and observed transit depth. These properties are determined by the relative sizes of the planet, host star and additional flux sources (other stars) within the photometric aperture. Since observations provide nearly full coverage of the planetary orbit, the resulting photometric phase curves enable a useful diagnostic for the identification of astrophysical FPs that can mimic an exoplanet transit signature. In §4 we examine the light curves of the Kepler sample and describe the nature of the planetary systems and how they are identified.

As an imaging instrument, Kepler also provides time-series measurements of the centroid of the photometric signal. When multiple sources are present in the photometric aperture, the photometric centroid can move in response to flux changes from any of the sources. This property allows Kepler pixel level data to be used to search for scenarios where a planetary transit-like event is produced by a diluted background eclipsing binary star (Batalha et al. 2010).

Paper II presents a theoretical exploration of the expected and predicted FP rate for transiting multi-planet systems. From the ∼190 000 targets observed by Kepler, there are roughly 2500 transit-like patterns of events in the KOI catalogue, split between PCs and EBs. Thus, for a Kepler target chosen at random it is unlikely that a transit event will be present. One of the most common classes of FP event is caused by a background eclipsing binary (BEB) in the aperture of the target star. The source of a BEB can either be an additional star that is found within or close to the photometric aperture or a bright star within the Kepler Field of View (FOV) that introduces flux in the photometric aperture due

1Based on NASA Exoplanet Archive 2013/11/12

– 4 –

to optical ghosting, such as mirror images, or electronic interference, such as CCD crosstalk (Coughlin et al. 2013). The occurrence rate of FPs is largely independent of the target stars and thus it is far more likely that a FP source will produce a single transit-like event as opposed to a photometric light curve containing transit-like signals from multi-planet sources. It is important to distinguish between FPs produced by background stars from those caused by instrumental effects. We identify the latter as period/phase (P/T0) collisions to indicate that the period and epoch solution for the candidate event are not due to a unique event. Rather, the transit signal from one target is seen on another target as well. P/T0 collisions account for most of the identified instrumental FPs. A full description and catalogue of P/T0 collisions can be be found in Coughlin et al. (2013). Figure 1 of Paper II shows the galactic distribution of Kepler targets, PCs and FPs. The results indicate that only a small fraction of the remaining Kepler PCs are likely to be background eclipsing binary (BEB) FPs.

The process of identifying and cataloguing FPs from the KOI list continues to evolve. Thus, the FP list from various iterations of the KOI catalogue (Borucki et al. 2011; Batalha et al. 2012, 2013) have different reliability rates. This paper describes in detail the steps taken to develop a reliable and uniform classification scheme and its application to the multi-planet sample to classify KOIs as false-alarms (FAs), FPs or PCs. FAs are transit event candidates with a signal-to-noise ratio (S/N) below a S/N threshold of 7.1 (see §5.2) or a transit candidate mimicked by stellar variability or an instrumental artifact. We find that the FP rate for multi-planet systems is low and consistent with the predictions from Appendix C of Paper II based on a statistical analysis of the FP rate found in the single planet population. The predicted FP rate allows us to conclude that the PCs that pass our FP and morphological tests would misclassify only ∼2 PCs, allowing us to claim that 768 PCs are bona fide planets with a confidence level greater than 99%.

As an example, consider only the non-transiting, transiting single planet and transiting double planet systems. Here we ignore the case of FP+FP, where two FPs are associated with the same target and estimate the number of FP for the double planet systems in the spirit of Paper II. There are approximately 140 000 stars that contribute to the transiting planet population (§4 of Paper II). After removing FAs and T/P0 collisions there are 2182 systems that show one transiting body and 284 systems that show two transiting bodies. From the single-planet systems, 662 systems were identified as FPs, which provides an estimate of the FP rate of 0.44%. Thus, from the 1500 good single-planet candidates 7 PC+FP systems are predicted. From the sample of 295 that have two transiting candidates, there are 6 that were identified as a PC+FP combination. Good agreement is found even in our simplified case. Of course, one needs to properly account for EBs and the entire range of multi-planet candidates and the multitude of PC and FP mixes that can be produced. These considerations are the

– 5 –

basis of Papers I and II, which provide predictions of FPs rates that are verified in this paper.

The combined analysis reported in Paper II and this manuscript validates more than 300 new Kepler multi-planet systems. Paper II introduces the binary star planet hosts Kepler- 132, where one star hosts two transiting planets and its companion hosts one transiting planet and Kepler-296, a pair of small stars with a total of 5 transiting planets, the multi-resonant 4-planet Kepler-223 system and two additional planets in the Kepler-80 = KOI-500 system that includes two 3-body resonances, as well as several high-multiplicity systems, including the new 5-planet systems Kepler-102 = KOI-82, Kepler-169 = KOI-505, Kepler-238 = KOI- 834 and Kepler-292 = KOI-1364, three new planets orbiting Kepler-84 = KOI-1589 (bringing the total count to 5) and partial validations of the 5-candidate systems Kepler-122 = KOI- 232 (4 planets validated) and Kepler-154 = KOI-435 (2 planets validated). Hundreds of new planetary systems are announced herein, with special attention given to four new planets with radii roughly twice that of Earth located in or near the habitable zones of their host stars.

This paper is organized as follows: In §2 a description of the planetary sample is presented. The adopted stellar parameters are discussed in §3. Detailed descriptions of the transit models and lightcurve analysis are described in §4. The process of identifying FPs can be found in §5. Subsection 5.6 covers centroid measurements that provide a clean sample of highly probable transiting multi-planet systems which we demonstrate in §5.9 are genuine extrasolar planets. We conclude with a discussion of the multi-planet population in §6.

2. Planet Candidate Sample

Photometric surveys for extrasolar planets are contaminated by FPs that are caused by eclipsing stellar binaries and transits and eclipses of stars that are spatially offset from the target stars. The Kepler-Object-of-Interest (KOI) catalogue is an inhomogeneous working list used to track transit candidates of interest identified from Kepler photometric light curves. The FP to PC ratio of the raw KOI catalogue is approximately 0.39 (Burke et al. 2013)^2. A quick survey of KOI dispositions (available on the Kepler exoplanet archive; Akeson et al. 2013) shows most of the FP occurrences are linked to events that show a single pattern of periodic transits. They rarely occur when there is evidence of multiple transiting objects, a fact first noted by Latham et al. (2011). While the vast majority of the catalogue is dedicated to exoplanet candidates and eclipsing binary stars, the list contains

2Based on KOIs 1-3149 having a FP or PC status on 2013/08/01

– 6 –

some astrophysically interesting light curves that do not show transits, such as Heartbeat Stars (Thompson et al. 2012). We have excluded events that have been classified as a nontransit event. Similarly, false-alarms (FAs) were also excluded based on a transit S/N of 7.1. The Kepler transit detection pipeline was designed to identify events that have at least 3 transits. However, through human examination of the photometric time series, some deep, single occurrence events are noted and catalogued. The orbital periods for some of these events have now been measured based on the detection of a third transit. However, there are 18 planet candidates for which only 1 or 2 transits have been observed. It is difficult to assess the FP nature of these candidates as one cannot reliably estimate the orbital period. These KOI are also excluded from our sample.

Given that the Kepler pipeline is continually undergoing substantial improvements, we restrict ourselves to exoplanet candidates found with Q1 – Q8 light curves. This includes the Q1 – Q5 (Borucki et al. 2011) and Q1 – Q6 (Batalha et al. 2013) lists and a subset of the Q1 – Q8 catalogue (Burke et al. 2013). The Q1 – Q8 candidate list includes data products based on Q1 – Q10 data. During this process additional multi-planet candidates were discovered and catalogued, including planet candidates found with independent methods such as QATS (Carter & Agol 2013). An example is KOI-351 (Kepler-90) which had 6 PCs found in the Q1 – Q8 sample but is now known to contain at least 7 candidates (Paper II and Agol et al. 2013). We have excluded these Q1 – Q10 discoveries to avoid a bias in our statistics that would overestimate the quantity of multi-planet systems for validation. Any multi-planet candidate found in Burke et al. (2013) that is not listed in our sample is a Q1– Q10 discovery. We used 3737 KOIs associated with 3008 stars in our analysis; 1210 planet candidates in multi-planet systems and 2527 planet candidates in single planet systems.

Table 1 lists the number of systems and planets that have been considered in our sample. Each row lists the number of systems that pass various tests, such as our FA test (§5.2), P/T0 collisions and transit characterization from models (§4.1). The columns indicate the number of planet candidates found in each system with S1 indicating that one planet candidate was found. M1 means that a light curve was identified to have multiple transiting candidates, but after cuts the number of remaining candidates has fallen to one. The columns labeled 2 through 6 indicate the number of systems with the corresponding number of planets that pass criteria indicated in the last column. Each test was chosen to eliminate and mitigate FPs (see §3 of Paper II), but only candidates labeled as FP are definitive FPs. For example, we do not validate candidates that show ‘V’-shaped light curves based on transit model fits. This distinctive transit shape can be produced by either a transit duration that is similar to the photometric cadence, a grazing planet with an impact parameter near 1, or stellar binary with a large value of R_p/R_⋆. Transit-modelling of a ‘V’-shaped transit leads to a large uncertainty on the measurement of quantities such as R_p/R_⋆, making it difficult to assess

– 7 –

the properties of the planet-candidate and identify blended BEBs. These candidates are not labeled as FPs, but they are also not validated as planets.

Approximately one-third of the entries in the KOI catalogue have been identified as eclipsing binaries either through light curve or centroid analysis. Criteria for KOI promotion have not been uniformly applied, and there have been some systematic biases in categorization based upon multiplicity of sets of transit signatures. For example, a low amplitude sequence of dips with alternating depths is generally categorized as an eclipsing binary and not given a KOI number, but if such a signature is seen for a target that has already has been classified as a KOI based upon another set of dips, it is given a KOI number and immediately classified as an FP, thereby providing a biased increase in the number of FPs in multis. Searching for additional candidates is terminated around targets that have been identified as FPs, although there is often a significant amount of time between initial identification as a KOI and labeling as a FP. If a target is first identified as an EB, then the pipeline transit search is terminated, and since most such identifications are done rapidly, the distribution is more strongly biased against combinations of EBs and planet candidates. To improve our estimate of the true FP rate, we supplement our FP list with the eclipsing binary catalogue^3. Since we are interested in EBs that roughly match the signal from a transiting extrasolar planet we only considered EBs that are detached based on having a morphological classification criteria less than 0.5 (Matijevic et al. 2012) and have a primary eclipse depth less than 2%. These criteria remove contact binaries, which have a characteristic w shape. This step increases the total number of FPs by 138.

3. Characteristics of Planet-Hosting Stars

We used a diverse set of measurements to estimate the properties of each stellar host of the Kepler multis that we validate as planets. Our goal is to obtain the best classification of each planet-hosting star given all of the information available to us rather than to produce a homogeneous data set. We prioritized classification in the following order, choosing for each target the first available option:

• Combined asteroseismology + spectroscopy analysis (Huber et al. 2013).

• Spectrometry Made Easy (SME; Valenti et al. 1996) analysis using spectra taken at the Keck I telescope.

3V3 retrieved 2013/04/24 http://keplerebs.villanova.edu/

– 8 –

• SpecMatch fitting (see below and Petigura et al. 2013) using spectra taken at the Keck I telescope.

• Stellar Parameter Classification (SPC) analysis of spectra taken at various telescopes (Buchhave et al. 2012).

• Modified KIC photometric classification from adjustments to original KIC values of T_{eff} , log g and [Fe/H] to match Yale-Yonsei (Demarque et al. 2004) stellar evolution models.

Note that by using this heterogeneous set of stellar characterization techniques, we sacrifice uniformity for accuracy, and care should be taken in performing statistical studies based on fit parameters.

To support the SME and SpecMatch analyses, high resolution spectra were taken of multi-planet candidate host stars with HIRES spectrometer on the Keck I telescope using the observing setup of the CPS group (Marcy et al. 2008). We acquired spectra with a resolution of R = 55,000 and a wavelength coverage of 360 – 800 nm, which have a S/N per pixel of 40 (or better in some cases that were used for the SME analysis) at 550 nm, corresponding to a S/N = 85 per resolution element. The spectra were observed without the iodine cell in the light path. Using the C2 decker, which projects to 0.^{′′}87 × 14.^{′′}0 on the sky, we removed the signal from moonlight that otherwise could contaminate the stellar spectra at the level of a few percent.

When determining atmospheric parameters of the planet host stars using SpecMatch, we compared each spectrum to a library of 800 spectra having T_{eff} = 3500 − 7500 K and log g = 2.0 − 5.0, which spans the FGK and early M type main sequence and subgiant stars. All library stars have accurate parallax measurements, allowing for good estimates of stellar mass and radius for each. We then compared the observed spectrum with that of each library star. The spectrum is placed on a common wavelength scale and normalized in intensity. The χ^2 value is calculated as the sum of the squares of the differences between the observed spectrum and each library spectrum. The final stellar properties, listed in Table 2, are determined by the weighted mean of the ten library spectra with the lowest χ^2 values. We adopted errors in each parameter by comparing results to a range of standard stars.

Stellar parameters are derived by matching atmospheric parameters (T_{eff} , log g, [Fe/H]) to stellar evolution models (M_⋆, Age, Z). Atmospheric parameters are based on SME (Valenti et al. 1996), SpecMatch, SPC (Buchhave et al. 2012), Asteroseisomology (Huber et al. 2013) or the KIC (Brown et al. 2011) including the revision of T_{eff} by Pinsonneault et al. (2012). For SME parameters we added 59 K to T_{eff} and 0.062 dex to [Fe/H] in quadrature following

– 9 –

the Torres et al. (2012) recommendation. For SpecMatch and SPC results we adopt uncertainties as reported, with preference given to SME and then SpecMatch. For stars without asteroseismic or spectroscopic constraints, we adopt T_{eff} from Table 7 of Pinsonneault et al. (2012) and log g and [Fe/H] as given in the KIC. For uncertainties we adopt values of 200 K in T_{eff} , 0.3 dex in log g and 0.5 dex in [Fe/H], in agreement with typical residuals of KIC values to stellar properties determined from asteroseismology and spectroscopy (e.g., Bruntt et al. 2012). We adopted the Yonsei-Yale stellar evolution models (Demarque et al. 2004) to determine stellar parameters. The model matching was done by varying the stellar mass, age and Z and comparing the model-derived values of T_{eff} , log g and [Fe/H] with the spectroscopic values with a chi-square statistic. An initial match was found by scanning in mass increments of 0.1 M_⊙ restricting ages from 0 to 14 Gyr, and identifying a best matching model. A Markov-Chain-Monte-Carlo (MCMC) routine was then seeded with this trial value of stellar mass, age and Z to determine posterior distributions. All stellar models with ages greater than 14 Gyr were excluded. In total 100 000 chain elements were generated for each star. The models were also used to determine posterior distributions for the stellar radius, luminosity and mean stellar density. The resulting stellar parameters are listed in Table 2.

4. Light Curve Analysis

Kepler photometry was used to both identify FPs and to characterize the transiting planets. We used Kepler Q1 to Q10, long cadence, simple aperture, photometric observations^4 gathered every 29.4 minutes over a time span of 868 days. These measurements do not account for the effects of dilution from the addition of stars near or in the photometric aperture, thus, there is a bias in our measured planetary parameters towards underestimating planetary radii. Measuring dilution and determining corrections are difficult tasks and outside the scope of our goal to validate hundreds of extrasolar planets. However, there are rough estimates of the dilution based on the KIC, retrieved from MAST, from which this bias can be estimated and used to place conservative upper limits on systematics introduced from contamination. The mean value of light contamination for validated Kepler planets is 5%. As the transit depth is proportional to (R_p/R_⋆)^2, a 5% dilution translates into a 2.6% systematic bias in the planetary radius, which is small compared to the uncertainty in the stellar radius. From our validated planet sample, the largest light contamination was found to be 20% of the total light for KOI-907 (Kepler-251), which translates into an error on the

4Observations labeled as SAP FLUX from FITS files retrieved from The Barbara A. Mikulski Archive for Space Telescopes (MAST).

– 10 –

planetary radii of 11.8%.

While Kepler had a high duty cycle, some transits were missed due to a variety of logistical details such as sky location, data downlink, spacecraft safe modes and a dead module. An extreme example is KOI-94 (Kepler-89) (Weiss et al. 2013), which has an effective duty cycle of less than 50% due to its location on the edge of one of the CCD detectors. The spacecraft rotates each quarter and this target lies in the gap between detectors during 2 of every 4 consecutive quarters. For a majority of our targets, the effective duty fraction after removal of flagged^5 data was approximately 86%.

We filtered the data to remove instrumental and astrophysical signatures that are independent of the planetary transit as follows: each observation was corrected by fitting a cubic polynomial to a segment of the time series photometric measurements centered on the time of measurement. A segment is defined by selecting observations that were taken within 1 day of the measurement. We also require that the time series not contain any gaps longer than 5 cadences (∼ 2.5 hours). If such a gap is encountered, the data collected near that gap are not considered. Such gaps were commonly produced by the monthly data downlinks. The removed data dropped the duty-cycle by ∼1%. After repointing the spacecraft, there was usually a photometric offset produced due to thermal changes in the telescope. Thus, astrophysical signals with timescales of approximately 2 days are strongly filtered by this process. The filter is destructive to the shape of a planetary transit. Thus, we exclude any measurement taken within 1 transit-duration of the measured center of the transit time and use an extrapolation of the polynomial fit to estimate corrections during transits. The transit duration is defined as the time from first to last contact, T_{dur}. The segment is fit with a cubic polynomial and used to measure the photometric offset, which is then removed. We repeat the process for each observation to produce a detrended time series. When significant transit timing variations are detected, we rebuild the detrended time series using the updated center of transit times.

An initial multi-planet photometric model was fit to each detrended light curve. The photometric model assumes non-interacting circular orbits and used the quadratic limb darkening transit model of Mandel & Agol (2002). We used limb-darkening parameters from Claret & Bloemen (2011), which were fixed for each target based on our stellar classification (T_{eff} , log g, [Fe/H]). The model was parameterized by the mean-stellar density (ρ_⋆), photometric zero point and for each planet (n) an epoch (T 0_n), period (P_n), scaled planetary radius (R_p/R_{⋆n}) and impact parameter (b_n). The semi-major axis for each planet candidate

5Observations with SAP QUALITY=0 from FITS files retrieved from MAST

– 11 –

is estimated by ( a R_⋆ )_3 ≃ ρ_⋆GP^2 3π , (1)

where the assumption was made that the sum of the planetary masses is much less than the mass of the host star. For a Jupiter-mass companion of a Sun-like star, a systematic error of 0.1% is incurred on the determination of ρ_⋆. To account for the ∼30 minute integration of Kepler observations, the transit model was sampled 11 times temporally with equal spacings within the integration window. The 11 separate models were then averaged. A best fit model was calculated by a Levenberg-Marquardt chi-square minimization routine (More, Garbow & Hillstrom 1980). This model was used primarily to seed our Markov Chain Monte Carlo MCMC) routines to measure fundamental physical properties of each planet.

4.1. Measuring Planet Parameters

Our main objective is to identify FPs and to select candidates found in multi-transiting systems that have a very high probability of being bona fide extrasolar planets. Our strategy was to examine each photometric light curve for signatures of stellar binarity: secondary eclipses, phase curve variations and a comparison of the transit model determination of ρ_⋆ to our classification and modeling of the host star. We also examine the populations of stellar and planetary systems to establish regions of parameter space, namely orbital period and impact parameter, that are most susceptible to contamination from FPs.

Our measured planetary parameters are listed in Table 3 and are based on a transit model fit similar to the description given at the beginning of §4, except that we have modeled each planet candidate in a system independently. We start by using the best fit model from the multi-planet model to remove the photometric signature of all transiting candidates except the one we wish to measure. We assumed a circular orbit and fit for ρ_⋆, T0, P , b, R_p/R_⋆ and ρ_c, where ρ_c is the value of ρ_⋆ when a circular orbit is assumed. Thus, each planet candidate provides an independent measurement of ρ_c. If the value of ρ_c is statistically the same for each planet candidate, then the planetary system is consistent with each planet being in a circular orbit around the same host star. We examine the distribution of transitdetermined values of ρ_c in Appendix A.

To estimate the posterior distribution on each fitted parameter, we use a MCMC approach similar to the procedure outlined in Ford (2005). To account for the strong correlation between ρ_c, b and R_p/R_⋆, we use a Gibbs sampler to shuffle the value of parameters for each step of the MCMC procedure and use a control set of parameters to approximate the scale and orientation for the jumping distribution of correlated parameters as outlined in Gregory

– 12 –

(2011). An initial control set consists of 2000 chains was generated by a MCMC run where the width of the Gaussian proposal distributions was adjusted to achieve a success rate of ∼25%. Once the success rate for a jump was between 20 and 30%, the width of the Gaussian was fixed for the duration of the calculations. The control set is updated during the MCMC run by adding every second accepted jump proposal parameter set and removing the oldest element. The control set is fixed once an acceptance rate between 20-25% is achieved. Any chain that was generated before the proposal sample was fixed was discarded. We found that this method allows the MCMC approach to efficiently sample parameter space even with highly correlated model parameters. We generated four 1 000 000 Markov-chains for each PC. The first 20% of each chain was discarded and the remaining sets were combined and used to calculate the median, standard deviation and 1, 2, 3σ bounds of the distribution centred on the median of each modeled parameter. Our model fits and uncertainties are reported in Table 3. We use the Markov-Chains to derive model dependent measurements of the transit depth (T_{dep}) and transit duration (T_{dur}). We also convolve the transit model parameters with the stellar parameters (see §3) to compute the planetary radius, R_p, and the flux received by the planet relative to the Earth (S). To compute the transit duration, we used Equation 3 from Seager & Mallen-Ornelas (2003) for a circular orbit,

T_{dur} = P π arcsin R^⋆ a [ (1 +^{Rp}_{R⋆} )^2 − (^a_{R⋆} cos i)^2 1 − cos^2 i ]_{1/2} , (2)

which defines the transit duration as the time from first to last contact. We estimate the ratio of incident flux received by the planet relative to the Earth’s incident flux, S = ( R_⋆ R_⊙ )_2 ( T_{eff} T_{eff⊙} )_4 ( a a_⊕ )_{−2} , (3)

where T_{eff} is the effective temperature of host star, T_{eff⊙} is the temperature of the Sun and a is the semi-major axis calculated with Kepler’s Second Law using the measured orbital period and estimated stellar mass.

4.2. Transit Timing Variations

We estimate transit timing variations (TTVs) for each light curve using the best fit models from §4 and §4.1 as a template. Center-of-transit times are measured by selecting data obtained within 1 transit duration of the predicted center of transit time (thus the time series has a length that is twice the transit duration). If the transit duration is less than 2 hours, then we select data within 2 hours of the center-of-transit time. We then

– 13 –

refit the transit model but we allow only T0 to vary. The measured center-of-transit time is then compared to the predicted time to produce the observed minus calculated transit time (TTV_n) for each transit, n. If significant variations are detected, we improve the transit model template by compressing and expanding the time interval between measurements by linearly interpolating between timing offsets observed for each transit. The improved template is then used to redetermine the transit times. We report our measured transittiming variations in Table 5. If fewer than 4 observations were selected for fitting, we do not report TTV_n. Note that here t_n is the measured transit time and not the prediction of a linear transit ephemeris (unlike Ford et al. 2011).

While the vast majority of the TTVs were processed in bulk, some KOIs with large TTVs received individual attention. When the center-of-transit time was shifted substantually away from the predicted transit time, the fitting process failed. An example is KOI-142 (Kepler- 88), where the transit times shift by ∼20 hours. For such cases, the previous two transit timing measurements were used to linear extrapolate an estimate of the next transit time to initialize the fitter.

5. Planet Dispositions and False Positive Identification

The adopted Q1–Q8 dispositions were produced by a combination of work developed for the general KOI catalogue (Burke et al. 2013) and the multi-planet population listed in this paper. The end result is a set of dispositions shared between the two papers. Each planet candidate was subjected to tests described below: lightcurve inspection by eye, a S/N threshold, searches for secondary events, phase-linked variations, odd-even numbered transit comparison and centroid motion during transit. The disposition of KOIs presented here and the underlying statistics presented in Paper II sets the stage for the validation of a large number of multi-planet candidates at greater than the 99 percentile; specifically, we expect ∼2 FPs from the 851 planets validated in §5.9.

One of the major results from Paper II (see §4 therein) is that the FP rate in multiplanet systems must be low. The predictions are that ∼27 FPs should have been detected in the multi-planet candidate sample, and that ∼2 FPs have been missed. Demonstration of the accuracy of the first of these predictions builds a strong case that currently viable planet candidates in multi-planet systems are bona fide planets. The types of FPs that can be searched for include: a planet transiting a star not physically bound to the Kepler target star; or an eclipsing binary star system or other astrophysical phenomenon. If a bound stellar companion is found, it is sometimes possible to determine which star is the source of the transits, but Kepler data are not sensitive to isolating the transit host in most bound

– 14 –

systems.

This section is dedicated to describing the tests that were carried out to identify FPs in our multi-planet sample. These tests include searches for secondary events and classifying the event as a planetary occultation or stellar eclipse (§5.3). Tidal interactions and motion of the host star around the center-of-mass produce variations related to the orbital period. When present, the amplitude of these variations reveals the masses of the binary components (§5.4). In the cases where the primary and secondary eclipses of a stellar binary with nearly equal mass stars are reported, the orbital period may be incorrect by a factor of 2. To test for this scenario we compare the depths of the odd- and even-numbered transit events (§5.5). One of the most powerful tests is the use of pixel-level Kepler data to focus on finding clean targets for validation by localizing the source of the transit on the detector (§5.6). A common source of FPs are centroid offsets due to motion in the difference of in- and out-of-transit combined images across a transit event. The most frequent source of centroid offsets are background eclipsing binaries that track the spatial density of background stars (see Figure 1 of paper II).

5.1. Quality of Model Fit

We calculated the reduced chi-square for each transit model. If the value was greater than 2 or less than 0.5, then the fit and photometry were visually inspected. In most cases, it was found that a transit overlapped an instrumental effect, the most common effect being photometric deviations observed after the instrument returned to nominal operations that involved a reorientation of the spacecraft. In these cases, the offending segment of data was excluded and the model fits were repeated. Other cases include models that produced a poor transit fit from convergence to a local minimum, excess scatter from stellar variability, and evidence of a stellar binary in the light curve shape from the presence of a strong occultation or ellipsoidal variations. This level of vetting was performed for both the single and multi-planet population.

From our inspection we discovered that KOI-1134.01 and 1134.02 were both tracing the same EB that had a period of 100 days but had transit depths that were heavily modulated due to third-light contamination that appeared as independent transit candidates in early analysis using only a few months of observations. We have labeled KOI-1134.01 as an EB FP and 1134.02 was labeled as a FA. KOI-1792.02 was found to be a FP with stellar variability mimicking a transit signal. KOI-2048.02 was identified as residuals of the transit fit to KOI-2048.01, thus 2048.02 was labeled as a FA and removed.

– 15 –

5.2. Signal-to-Noise Ratio

The signal-to-noise ratio (S/N) was calculated from depth of the transit using the transitmodel and noise was estimated by the standard deviation of observations obtained outside of transit and then scaled with a geometric sum to match the transit duration, yielding

S/N = √ N_T T_{dep} σ_{OT} , (4)

where T_{dep} is the transit depth, N_T is the number observations obtained during transit and σ_{OT} is the standard deviation of out-of-transit observations. The estimation of the S/N assumes that the depth of the transit is uniform, which is a good approximation for small Earth-sized planets with central transits (b=0). For relatively large planet-to-star radius ratio and/or large impact parameters, our technique will overestimate the S/N, but this has minimal impact on our assessment of PCs. The impact parameter is not well defined for low S/N events, but the transit depth and duration are measurable quantities.

We used S/N estimates for two purposes: to identify FAs and to determine a threshold for planet validation. The KOI catalogue has an adopted S/N limit of 7.1 to classify a target as a KOI. FAs are present in the KOI catalogue as initially the transit signal was estimated to have a S/N greater than 7.1 (Jenkins et al. 2002), and then as additional observations were gathered the S/N dropped below 7.1. These types of events inform us that validation of transiting planets with a S/N near the KOI threshold has a risk of introducing FAs, which we will now assess.

Using a S/N cut of 7.1 based on the transit depth and visual inspection, 26 KOIs in multis were classified as FAs: KOI-111.04, 439.02, 489.02, 966.02, 989.01, 1070.03, 1134.02, 1198.04, 1312.01, 1316.02, 1408.02, 1576.03, 1639.01, 1639.02, 1792.02, 1940.02, 1961.02, 2048.02, 2160.02, 2188.02, 2224.02, 2261.02, 2339.02, 2473.02, 2533.02, 2586.02. For 15 systems, only a single planet candidate remained, as indicated by the M1 column in Table 1 when the S/N cut is applied. The objects were considered single-planet systems for statistical counts. The rate of FAs from the single-planet and multi-planet population were both found to be ∼2%. As FAs do not represent real detections (quite the opposite) there is no reason to expect the rates to be predictable or reliable. The KOI creation process has been very inhomogeneous. This has caused the introduction of biases that favour finding and identifying additional planet candidates once the first candidate in a system has been found. This is especially true because of the notion that the FP rate for multi-planet systems is low. Quantifying this human bias is difficult and is part of our motivation to choose a larger transit S/N cut of 10 for planet validation.

The distribution of the transit S/N is shown in Figure 1. There is a rise in the observed

– 16 –

number of planet candidates from a S/N of 50 to ∼15. The increase is driven by the increase in the number of planet candidates towards smaller radii and the increase in Kepler targets towards fainter magnitudes. A sharp drop is observed at S/N below 15, which marks the transition where the KOI catalogue becomes significantly incomplete. We also inspected all transit candidates with a S/N less than 15 and found convincing transit signals for all candidates with a S/N greater than 10. Based on our observation of the S/N distribution shown in Figure 1 and inspection of the observed transit we only validate planet candidates with a S/N greater than 10. We expect a large number of lower S/N candidates in the range of 7.1 to 10 to still be good PCs.

5.3. Occultation/Secondary Eclipse Search

The primary signature of an EB relative to a transiting planet is the presence of eclipses of different depths due to the difference in surface brightness of the two orbiting stars. The change in depth can be quite dramatic depending on the nature of the two stars. As Kepler photometry has high precision and a spectral bandpass extending to 850 nm, occultations or eclipses can reliably be found for companions with radii similar to Jupiter with temperatures greater than approximately 2000 K. For bright host stars (Kepmag ∼ 10) this limit can be pushed to even cooler temperatures (e.g., TReS-2b, Barclay et al. (2012)). As such, a secondary event can be due to a secondary eclipse from a stellar binary, or an occultation when a planet is blocked by the host star. To distinguish between secondary eclipses and occultations, we estimated the expected equilibrium temperature (T_{eq}) for an orbiting body heated by incident stellar flux and compared it to an estimate of the temperature (T_{effp}) based on the depth of the occultation. The expectation is that a star, which is self luminous from nuclear fusion, will have a temperature T_{effp} that is much larger than T_{eq}. We also test whether the depth of the occultation is consistent with reflected light from a planet by computing the geometric albedo, A_g in the Kepler bandpass. The secondary event is inconsistent with the planet hypothesis if A_g is significantly greater than unity.

Although visual inspection reveals some obvious occultations present in the data, we performed a more thorough search to identify occultations and eclipses. To search for secondary events the light curve was phased to the orbital period and for each phase point the mean was calculated. Observations that occurred within 1 transit-duration were compared to mean values computed at phases within ±1 transit duration. The difference divided by the standard-deviation of observations at all phases was computed and used to identify occultations at any phase outside of transit.

To distinguish between planetary occultations and stellar eclipses, we compared the

– 17 –

event depth with the occultation depth expected by a highly radiated exoplanet. We estimate the equilibrium temperature by

T_{eq} = T_{eff} (R_⋆/2a)^{1/2}[f(1 − A_B)]^{1/4}, (5)

where R_⋆ and T_{eff} are the stellar radius and temperature, a is the semi-major axis, A_B is the planet’s Bond albedo, and f is a proxy for atmospheric thermal circulation. To calculate the mean, we assume A_B = 0.1 for highly irradiated planets (Rowe et al. 2006) and f = 1 for efficient heat distribution to the night side. The occultation depth was used to estimate the temperature of the companion (T_{effp}) using our best estimate of the stellar parameters,

T^4_{effp} = T^4_{eff}

R^2_⋆ R^2_p F_p F_⋆ , (6)

where F_p/F_⋆ is the ratio of the companion and stellar flux and is equal to the depth of the occultation. We are assuming that the occultation depth observed over the Kepler bandpass is a proxy for the true bolometric flux ratio. We estimate uncertainties in T_{eq} and T_{effp} by propagating our determined errors in the stellar parameters from Table 2. We also estimate whether the occultation could be due to reflection rather than thermal emission by estimating the geometric albedo, A_g = F_p F_⋆ a^2 R^2_p

, (7)

In the case that T_{effp} is greater than T_{eq} at the 99.7 percentile (3-sigma) and A_g is greater than 1, we identify the event as a stellar eclipse and the candidate as an EB FP. While unexpected, such a test may classify self-luminous planets (e.g., youth or external forces) as FPs.

A number of FPs were detected through the identification of secondary eclipses (see §5.8). The only planet in a multi-planet system with a detected occultation was Kepler-10b with A_g < 1 and T_{effp} ∼ T_{eq}. The lack of detected occultations in the multi-planet population is a consequence of the dearth of large-highly irradiated planets in these systems (see Figure 3). For the single planet population, it is likely a handful of EBs that show occultations are classified as close-in Jupiter-sized planet candidates heated to ∼2000 K because such planets have an occultation and transit depth similar to an eclipsing low-mass star. The philosophy for the KOI catalogue has been to keep a candidate classified as a PC until strong evidence is presented that shows the FP nature of the candidate. A consequence is that a handful of FPs will be misclassified as large (Jupiter-sized) candidates, which has no impact on our validation of multi-planet systems.

– 18 –

5.4. Phase Linked Variations

The orbital motion of a companion is imprinted in the photometric light curve due to day-night effects (thermal emission and reflectivity), ellipsoidal variations from gravity darkening due to tidal forces and Doppler boosting from orbital motion. The latter two effects are dependent on the mass of the companion and, when present, can be used to estimate the mass of the companion (e.g., Mazeh et al. 2013).

There are cases when a companion interacts with the stellar surface through magnetic fields and produces star spots that could be misinterpreted as phase linked variations due to a massive companion (e.g., Tau Bootis (Walker et al. 2008)). Thus our analysis would label a planet such as Tau Bootis as a FP.

To search for phase-curve variations (only relevant for short period systems), we filtered the data using the same procedure described in §4 except we changed the time-scale of the polynomial fitter to 5 days instead of 2 days as the filter is destructive to astrophysical signals with a similar or longer time-scale. This means our initial search is not sensitive to phase-linked variations on these longer timescales. The search was performed by calculating the occultation depth statistic introduced in §5.3, which is equivalent to average filtered data with a width equal to the transit duration. The standard deviation of the set of occultation measurements was calculated. This value was compared to the standard deviation of the data. This test determines whether the scatter is Gaussian on transit-duration timescales. When the ratio was found to be greater than 2, variability in the phased light curve is detected. In these cases we inspected the light curves and found evidence of coherent EB effects as well as variable stars with fast pulsation or rotation timescales.

As was the case with the occultation search, it is expected that phase-linked variations will be rare because highly-irradiated Jupiter-sized objects are rare in the Kepler multiplanet sample. KOI-1731.02 and 1447.02 were found to show phase-curves and labeled as FPs. From the single-planet population, phase-curves were discovered in KOI-23, 130, 143, 631, 636, 681, 699. If ellipsoidal variations are source of the signal, then the mass of the companion was estimated which ranged from ∼0.1 to 0.23 M_⊙ indicating that these sources are EB FPs.

5.5. Odd-even Metric

The occultation/eclipse search is effective when the orbital period is correctly estimated. In cases when EB eclipses are similar in depth, it is common to have the period off by a factor of 2. For most EBs, the depths of the alternating (odd- and even-numbered) transits

– 19 –

differ. We search for this odd-even effect by separately modeling the odd- and even-numbered transits where we only allowed R_p/R_⋆ to vary and the other parameters were fixed to their global solution. We used the change in R_p/R_⋆ as a proxy for a change in transit depth. When the change was greater than 3σ, we inspected the transit light curves to insure that the effect was real. For the cases where we noticed spot-crossing-induced variations in the transit depths, the systems were retained as candidates.

From the multi-planet sample, only KOI-966.01 was found to exhibit an odd-even transit effect. Thus, the true orbital period is double the reported KOI value. From the single-planet population 102 candidates had detected odd-even effects, although this count is incomplete as a FP is not always searched for additional effects or FP signatures in the light curve.

5.6. Centroid Analysis

A dominant source of false positive planetary transit detections is eclipsing binaries, or giant planet transits, on background stars that are captured in the aperture of the target star (BEB). These background signals are diluted by the target star and can have the appearance of small-planet transits. In this subsection we describe the method we use to find KOIs with “clean” centroids, where the measurement is of high quality and there is no indication that the transit is not on the target star. This “clean” centroid standard, described in detail below, is a more stringent centroid standard than that used for planet candidate status (see, for example, Batalha et al. (2013)), and gives us confidence that the centroid signal is coincident on the sky with the target star.

We use centroid analysis to identify KOIs that are not clearly on the target star. The centroid method we use is the fit of a Point Response Function (PRF) to the pixel difference image constructed by subtracting an average in-transit image from an average out-of-transit image (Bryson et al. 2013). This centroid method provides an offset from the target star position for each quarter, and the final offset for the KOI is a robust average of the quarterly offsets. We also use data quality metrics that indicate whether the data support the centroid offset measurement. We do not validate a KOI if the centroid offset suggests that the transit is not very close to the target star, or if the data quality does not provide confidence that the transit signal is on the target star. This centroiding method does not work for highly saturated targets. Our treatment of saturated targets is described in §5.6.1.

We provide here a brief overview of the PRF-difference image centroid method. For details see Bryson et al. (2013). PRF-based centroids are measured on both out-of-transit and difference images quarter by quarter. When the target star is isolated, the centroid of the

– 20 –

out-of-transit image gives the position of the target star. Assuming that the transit source is the only source of variability in the aperture, the centroid of the difference image gives the location of the transit signal source. These quarterly centroid measurements are robustly averaged to estimate the target star and centroid signal locations on the sky. These average locations are differenced to provide the average offset of the transit signal from the target. The robust average also provides a 1-σ uncertainty per quarter, which is propagated through the robust average and offset calculation to provide an offset uncertainty. An alternative method for estimating the centroid uncertainty is via a bootstrap, using a resampling with replacement of the quarterly centroid measurements. The bootstrap-estimated uncertainty is also propagated through the robust average and offset calculation. We choose the larger of the two offset uncertainties when performing the cuts described below.

Centroid measurements are subject to several systematic errors, caused primarily by errors in the measurement of the Kepler PRF and crowding by background stars. The systematic error due to PRF error is mitigated by computing the offset as the difference between the PRF centroid of the out-of-transit image and the PRF centroid of the transit signal in the difference image. Because the transit source and the target star are near each other on the Kepler focal plane, their PRF errors are very similar so centroid systematic errors due to PRF error approximately cancel. The residual PRF error systematic varies from quarter to quarter and is statistically zero mean, so averaging over quarters further reduces PRF-error-driven centroid systematics. The residual systematics have a statistical standard deviation of less than 0.1^{′′}. To account for this systematic error, a constant 0.067^{′′} is added in quadrature to the final offset uncertainty. This added constant does not, however, eliminate all apparently significant offsets due to systematic error, so we pass any KOI with offsets less than 0.3^{′′}, even if that offset is formally statistically significant.

In a few cases there is a field star in the target’s aperture that is brighter than the target. In this case the centroid of the out-of-transit image is strongly biased by the bright star, and the centroid offsets are invalid. We detect such cases by computing the offset of the out-of-transit image centroid from the catalog position of the target star, and declare the centroid measurement to be invalid if the offset of the out-of-transit image centroid from the target star catalog position is ≥ 1.5^{′′}.

We classify a KOI as having “clean centroids” if it passes three criteria, described in more detail below: 1) it has a good centroid measurement, 2) that centroid measurement indicates small offsets from the target star, and 3) there is at least a 99% probability that the transit signal is on the target star rather than another known star.

– 21 –

Good Centroid Measurement The quality of a centroid measurement is determined by several factors, most notably the transit S/N and systematic error. We do not validate KOIs as planets for which difference images are not available. There are three ways in which a KOI can fail to have a good measurement:

• When the S/N is very low, the measured offset uncertainty can be too large to sufficiently localize the transit signal. When the offset uncertainty is ≥ 1.5^{′′} we say that the KOI does not have a good measurement.

• The measured offset of the out-of-transit centroid from the target star’s catalog position is ≥ 1.5^{′′}, indicating that it is likely that the out-of-transit centroid measurement is strongly biased by crowding.

• The quality of the difference image in a quarter is determined by measuring the correlation of the difference image pixels with the fit PRF. If the correlation is less than 0.7, we consider the signal in the difference image too weak to trust the centroid value; otherwise we say that quarter has a good PRF quality. We demand that there be at least three quarters with good PRF quality, or that with 2/3 of the observed quarters have good PRF quality, otherwise we say the KOI does not have a good measurement.

Small Offsets We demand that the measured offsets be close to the target, satisfying both of the following criteria:

• The offset is statistically close, that is the offset is < 3σ, or the offset is < 0.3^{′′} to allow for small systematic error.

• The offset is smaller than 4^{′′}.

Probability ≥ 99% The systematic due to crowding is addressed via forward modeling of the observed pixels based on catalogs and the Kepler PRF (Bryson & Morton 2013). A synthetic pixel scene is created for each quarter by placing a flux-scaled PRF at the pixel location of every known star close enough to contribute flux to the observed aperture. In this way a synthetic pixel image modeling the average out-of-transit image is created for each quarter. A synthetic in-transit pixel image is created for each star in the aperture by reducing the flux of that star by the transit depth that best reproduces the overall observed transit depth, accounting for dilution. These images are analyzed for each star via difference-image PRF centroiding just like the observed pixels. The resulting offsets provide a prediction for the transit signal offset from the target star under the hypothesis that the

– 22 –

transit occurs on each star in the aperture. The predicted offsets are compared with the observed offsets by inferring the underlying probability distributions. For each star in the aperture, the normalized integral of the product of the observed and modeled distributions provides a relative probability that the transit signal is at the same location as that star, when the modeled depth on that star is less than 100%. An unknown background source is also included as an alternative hypothesis. For details see Bryson & Morton (2013). For this paper we assume an underlying Gaussian distribution, which is characterized by the mean and uncertainty of the offset averages. We say a KOI is not clean if its relative probability is less than 0.99.

The KOI is considered clean if the measurement quality, small centroid offset, and probability criteria are all satisfied.

5.6.1. Manual KOI Inspection

Some KOIs considered in this paper do not have well-computed centroids, either because the KOIs are on saturated target stars or because the centroid did not satisfy the “good measurement” criterion. Some of these KOIs were subject to manual inspection based on the criteria described in this section. If they pass inspection, they are considered “good”. We do not consider a “good” classification as strong as a “clean” classification, but as described in Paper II the multiple planet probability boost allows us to validate “good” KOIs.

Saturated Target Stars When the target star is saturated or near saturation (Kp < 12), centroiding methods based on the PRF are no longer valid. In these cases the transit signal has a distinctive pattern in the difference image (Bryson et al. 2013). Visual examination of the difference image in each quarter provides a qualitative indication that the transit source is in the same pixel as the target star. Specifically, when the transit is on the target star, the transit signal appears at the end of the saturated columns, as well as in the nonsaturated wings of the PRF. We pass a saturated KOI as “good” when the transit signal visibly appears as expected at the end of the saturated column and the transit signal wings match the non-saturated wings of the target star. All of the saturated multis considered in this paper for which there are difference images and which are not already confirmed planets passed this test.

Bad Centroid Measurement When there are two “clean” KOIs in a system and additional KOIs that fail the “good measurement” criteria, manual inspection of the pixel data

– 23 –

was performed to see if there is any indication that these additional KOIs are not at the target star location. The typical situation is that the difference images were too noisy to support a high-quality centroid measurement. In this case, when manual inspection indicates that the transit signal is on the same pixel as the target star, and that there is no significant signal in the difference image away from the target star, we consider the KOI to be “good”.

5.7. KOIs with Validation Issues from Imaging

Table 4 lists candidates that have newly-detected companions inside the photometric aperture by Adams et al. (2012, 2013) and one of us (S.H.). Because these companions were not in the catalog used to compute the probability criterion described in §5.6, we give these special attention. Table 4 gives the observed offset of the newly found companion from the target star and the offset of the companion from the measured transit source in units of the centroid uncertainty. When the companion star is more than 3σ from the measured transit source we consider that companion as ruled out as a source of the transit signal. Because our validation criteria includes the requirement that the centroid source be no more than 3σ from the target star, companions outside of 4σ will not reduce the KOI’s probability of being on the target star to less than 99%. We do not consider whether or not the companion is gravitationally bound to the primary star.

When the companion stars are within 3σ of the transit position, the transit signal is not necessarily a false positive. However, this indicates that we did not determine which star was the source of the transits. We do not validate such candidates unless we have strong evidence that the nearby star is a bound companion to the Kepler target as described in §9 of Paper II.

5.8. Identified FPs Among the Multis

All of the FP tests described above have been applied to the original sample of 1212 planet candidates identified as potential multi-planet systems. For each FP a brief description of the types of FPs detected in multi-planet transiting systems is presented below. The FP disposition was used for a comparison of the single planet, multi-planet, EB and FP samples. There are three classes of FPs used to describe the nature of the transiting object: (1). Period and epoch (P/T0) collisions where multiple sources show the same orbital period and transit times. Such events can be produced by direct PRF contamination, optical reflections or electronic interference, such as crosstalk (Coughlin et al. 2013), (2). Flux FPs, where

– 24 –

the photometric light curve shows evidence of an EB. (3). Active-Pixel-Offsets (APOs) FPs where centroid measurements of the photometric aperture indicate that the source of the transits is due to a source offset from the Kepler target. Categories (2) and (3) are not mutually exclusive. Table 1 gives a break down of the planet candidates for various cuts and number of systems with 6 candidates, 5 candidates, 4 candidates and so forth.

There were 12 P/T0 collisions detected in the following KOIs: 376.01, 489.01, 989.02, 1119.01, 1196.01, 1231.01, 1231.02, 1747.02, 1803.02, 1806.01, 1944.02, 2188.01. A secondary eclipse was detected for most of these systems, indicating that the primary sources of P/T0 collisions are EBs. The distribution of P/T0 collisions will not favour transit candidate targets, thus it is expected that the rate of P/T0 collisions is lower for multi-planet sample relative to the single planet sample. KOI-489.02 was flagged a FA with a transit S/N of 6.6, thus the KOI-489 system does not count as a multi-planet system in any of our statistical counts.

KOI-199.02 shows a secondary eclipse with a depth of 50 ppm and an orbital period of 8.8 days. The depth of the secondary eclipse is inconsistent with the planet hypothesis. Derived values from the occultation are A_g ∼ 22, T_{eff} ∼ 4500 K and T_{eq}=1200 K.

KOI-376.01 is a P/T0 collision and shows strong quarterly depth variations due to quarterly variation of contamination. The second candidate, KOI-376.02, has a period of 1.4 days and shows a strong secondary eclipse with an observed depth of 260 ppm. Since the signals observed are likely heavily diluted, the true eclipse depths are likely much deeper.

KOI-379.01 was found to have an additional star within the photometric aperture with a separation of 1^{′′}. Centroid analysis points towards the fainter star as the source of the transits, thus this candidate has been flagged as an APO. Centroids analysis of KOI-379.02 is inconclusive to determine which star is the source of the transits and is kept as a PC.

KOI-414.01 shows a secondary eclipse with a depth of 400 ppm. The location of the secondary eclipse indicates that the orbit is non-circular. KOI-414.02 shows a clear centroid offset and was flagged as an APO.

KOI-2671.01 was marked as a FP as a secondary eclipse was detected. The occultation shows the orbit to be eccentric (35 hours offset). KOI-2671.02 has a centroid offset and was labeled as an APO.

KOI-989.01 and KOI-989.02 are the same event with the periods being integer multiples of one another. These two candidates were also flagged as a P/T0 collision. The confusion of these two candidates arose because of strong variations in the quarter transit depths from quarterly dependence of dilution. KOI-989.03 remains as a PC.

– 25 –

KOI-549.01, 549.02, 1196.01, 1231.01, 1378.02 and 2007.01 are flagged as APOs from centroid analysis. KOI-1119.01 is a P/T0 collision and 1119.02 shows strong centroid offsets. KOI-1342.01 shows a small offset of 0.9^{′′} with a significance of 4.1σ. It is therefore considered to be an APO. KOI-2159.02 shows centroid offsets and a secondary eclipse. KOI-1731.02 shows an occultation and phase-linked variations and was labeled as a FP because its transit depth appears to be heavily diluted.

KOI-966.01 shows an odd-even transit effect, but KOI-966.02 was labeled as a FA due the low S/N of the transit event. Thus, the KOI-966 system does not count as a multi for our statistics.

KOI-1447.01 showed a ‘V’ shaped transit event with a depth greater that 15%. While transit-depth is not an indication of the FP nature of the candidate, KOI-1447.02 shows large amplitude phase-linked variations. Thus, KOI-1447.02 is a clear FP which removes the KOI-1447 system as a multi-planet system, and due to the large transit-depth we classified 1447.01 as a FP.

From the single-planet population of 2482 PCs, 976 were classified as FPs resulting in a FP rate of ∼40%, which, as expected, is in stark contrast to the multi-planet FP rate. In total we found 26 FPs (including P/T0 collisions) in the multi-planet sample of 1167 PCs remaining after the removal of FAs and single planets. A few of the classified FPs had an associated FA, such as KOI-1231.02, and are included in the FP totals for the single planet population. The 26 FPs include cases of two FPs associated with the same target. Candidates that were flagged as having not clean centroids in Table 3 are not FPs and remain as unvalidated PCs. There is no strong evidence to suggest that any one target with not clean centroids is a blend, however, the probability of blends existing within the population is large enough that we cannot validate this sample at the 99 percentile. The 26 FPs are found around 20 systems, with 6 double FP systems, 12 cases of FP associated with a single PC and 2 cases where 2 PCs and 1 FP where associated with the same target.

The results of the multi-planet disposition are summarized in Table 4 of Paper II, which gives a comparison and breakdown of the expected FP rate. The agreement between the observations and predictions is very good which leads to our conclusion that a vast majority of transiting candidates found in multi-planet systems are genuine planets. After removal of FPs there are 1129 remaining multi-planet candidates. The next step is to explore this large population of candidates and set additional criteria to reduce the chances that undetected blends still exist. There will be a population of FPs from blends that exist in the Kepler transit sample, but cannot be detected via our methods, for example, a blend from a BEB where the separation from the target source is too small to be detected by centroid motion.

– 26 –

5.9. Validation of Multi-Planet Candidates

To reduce the number of potential FPs in our validated list of planets in multi-planet systems, we eliminate regions of phase space where we have reduced confidence. For example, we have reduced confidence in the validity of a PC if centroids cannot localize the position of transit to eliminate the chance of a background blend at the 99 percentile. The first requirement is that a candidate has a S/N > 10 as established in §5.2. This insures that the multi-planet sample is free of FAs and removes an additional 21 candidates after the removal of FPs and P/T0 collisions.

Using the analysis for §3, §4 and this section, we are able to use the criteria set out in Paper II to select a population of multi-planet transiting systems that have a FP rate substantially less than 1% (additional details below). Table 1 lists the number of planet candidates after various cuts and tests are applied. The various cuts are: FA, where either a transit candidate has insufficient S/N (< 7.1) or was labeled as a non-transit event such as stellar variability or was observed to have less than 3 transits. Col indicates a P/T0 collision. These sources are non-unique by nature so they are classified separately. FP indicates when a FP is identified that is a not a P/T0 collision. A FP can either be an EB masquerading as a planet candidate or a diluted signal where the source of the transits has been localized off the Kepler target. SN The transit models were used to determine the S/N of the phase folded transit for each candidate. We adopted a threshold of S/N > 10 to consider a transit event. P marks period cuts. We require the orbital period to be greater than 1.6 days due to the increased rate of FP found with shorter orbital periods (See Figure 2 in §5.8 and Appendix A of Paper II). b marks when cuts are made based on the measured impact parameter. When a transit is ‘V’ shaped there is a larger chance that a FP has been identified. This does not mean that ‘V’ shaped events are FPs, only that we have less confidence in declaring such objects as planets. The fraction of ‘V’ shaped signatures that are produced by EBs as opposed to transiting planets is far larger than that for ‘U’ shaped profiles. Our criteria for ‘V’ shaped transits is that b + b_σ + R_p/R_⋆ > 1.00. centr indicates the centroid test as outlined in §5.6. A target that does not pass our centroid test is not a statement that the object is a FP/APO, but rather that we had insufficient information to localize the source of the transits on the Kepler target. The column # of multi-pl indicates the total number of multi-planet systems that pass the indicated test. The column # of new multi-pl indicated the total number of multi-planet systems that pass the indicated test and have been previously verified (already assigned a Kepler-ID).

Figure 2 shows the cumulative distribution of orbital periods for candidate multi-planet systems (black), candidate single planet systems (red), FPs KOIs (green), P/T0 collisions

– 27 –

(cyan) and EBs from the Kepler Eclipsing Binary catalogue^6. FA are not considered. The distribution of EBs shows a large population of short period events due to the inclusion of contact binaries. The sample of FPs from the KOI catalogue also shows a relatively strong population of FPs at short orbital periods, which is different from the EB population, but there is still a much larger fraction of FPs at shorter orbital periods compared to the PC populations. There are two reasons for this difference: (1) KOIs are selected based on a visual inspection of the photometric transit-event, with a requirement that the event has an appearance of a planetary transit. This process heavily reduces the number of contact binaries in the KOI catalogue, as a distinct transit that shows a clear ingress and egress are not present. (2) The Kepler transit search algorithm does not conduct searches for events with periods less than 0.5 d, so unless a strong harmonic of the orbital period is detected at a longer period, many short period events will also be missed. Similarly, the distribution of P/T0 collisions, which is dominated by EBs, shows a larger fraction of events with short orbital periods relative to the PC distributions. As articulated in Appendix A of Paper II, the expected abundance of unidentified FPs in multis to planets in multis is far larger at small orbital periods than at large ones. Thus we do not validate PCs with orbital periods less than 1.6 days. We also excluded systems with an orbital period less than 4 days and a S/N < 15, due to concerns of an increased FP rate and the lack of well constrained transit model parameters due to the low S/N of the transit. Eliminating candidates with a P <1.6 days reduced the sample of 1107 PCs in multis that passed our FP and S/N tests to 1084 PCs as shown by row 6 of Table 1.

Dispositioning of PCs relies on transit models to characterize the orbiting companion. A transit can be ‘V’-shaped in appearance when: the transit duration is comparable to the photometric cadence or we have a grazing transit (b + R_p/R_⋆ ∼ 1). The transit model incorporates the cadence time to convolve the synthetic lightcurve to match observations and allows a quantitive assessment as to whether a grazing transit is observed. A grazing transit also results in increased uncertainty in transit model parameters, which makes assessment of the transit event difficult. From the single transit population, after the removal of FAs, 16% have grazing or close to grazing transits (b + b_σ + R_p/R_⋆ > 1.00), which drops to 8% after the removal of FPs and P/T0 collisions, which is larger than one would expect based on an isotropic distribution of orbital planes. Almost half of the grazing transit single PCs have a radius greater than 15 R_⊕, which indicate that a large fraction of this population are likely FPs. However, planetary radius is not a criterion to label a candidate as FP because an upper limit on the radius of a planet is not well established, and measurement uncertainty on ‘V’-shaped transits precludes making a definitive statement regarding the absolute radius

6http://keplerebs.villanova.edu/

– 28 –

of the transiting object. From the multi-planet population, after the removal of FAs, 3.8% are measured to be grazing or near grazing, which drops to 3.1% after the removal of FPs and T/P0 collisions. Only 1 (5.9%) of the grazing multi-planet candidates has a large inferred planetary radius, KOI-1477.01, which is associated with an EB (KOI-1477.02). It is very likely that KOI-1477.01 is also an EB FP. The lower rate of grazing transits in the multiplanet population leads us to conclude that a large fraction of the grazing transits in the single-planet population are FPs. This means that there is a higher probability of a FP being found when a grazing transit is present, thus we do not validate multi-planet candidates that have b + b_σ + R_p/R_⋆ > 1.00. These KOIs are still good PCs. Application of FP, P/T0, S/N and cuts based on impact parameter reduces the set of multi-planet candidates for validation to 1054.

Cuts based on S/N, period and transit-shape use the transit models and comparison with the single planet population to identify regions of model parameter space with reduced confidence in the validity of a planet candidate; when the rate of FPs is observed to be larger relative to the multi-planet population. Cuts based on methodology presented in §5.6 where PRF models were used to identify which multi-planet candidates have at least a 99% probability that the transit signal is on the target star rather than another known or unknown star. This statement means that there is a low probability that a blended background transit event is present. After application of our centroid criteria the number of multi-planet candidates that is still considered for validation is 851.

As previously mentioned, planet radius is not a criterion for classification of a transiting candidate as a FP. A problem thus arises for large Jupiter-sized planet candidates as there is a degeneracy in radius for planets, brown dwarfs and low mass stars. Additional dynamical tests were applied to the multi-planet candidates: using Hill’s criterion to test for stability of neighboring pairs of planet candidates, and when R_p+ 2σ_{Rp} > 9 R_⊕, dynamical fits to transit times observed in Q1 – Q14 Kepler long cadence data were conducted to determine whether the giant candidates can have masses exceeding 13 M_J, assuming all of the candidates orbit the Kepler target. Details of both tests can be found in Appendix C of Paper II. All candidates that passed the above tests, apart from the special case of KOI-284 (Kepler-132, addressed in §9.1 of Paper II), passed the stability tests. Table 3 categorizes candidates as having passed, failed or being to small to have been tested for mass limits large enough to be stars. The last row of Table 1 gives the number of planetary candidates after all tests have been applied and gives us a total of 851 planets that we validate. From this sample, 60 have been previously validated via other methods, thus we are able to introduce 768 newly validated planets, which roughly doubles the current number of confirmed and validated planets. Planets discovered and confirmed by the Kepler mission currently account for more that half of the known and validated extrasolar planets.

– 29 –

6. Population of Validated Planets and Discussion

After the application of all the tests listed above, we validate 851 extrasolar planets associated with 340 planetary systems. These systems are expected to have a FP rate that is significantly less than 1% due to the reasons listed in §5.9 and the theoretical framework laid out in Papers I and II. From this sample, 768 candidates in 306 systems have not been previously validated, but are now extrasolar planets validated above a confidence level of 99%. Thus, we introduce Kepler-100 through 405. From this population there are 106 new planets that have a radius less than 1.25 R_⊕ compared to 16 that have been previously validated. There are 6 planets with incident solar flux, S, less than 1.5 times that of the Earth including four planets: KOI-518.03, 1422.04, 1430.03 and 1596.02 (Kepler-174 d, Kepler-296 f, Kepler-298 d, Kepler-309 c respectively) that are new validations that we discuss below. Figure 3 plots incident flux versus radius and displays our new validations as filled circles. Multi-planet candidates that pass all tests except our centroid criterion are plotted as open circles and single planet candidates after the exclusion of FPs are plotted as small dots. The falloff in the number of planets below 1 R_⊕ is driven by incompleteness due to insufficient S/N. The falloff in the number of planets with S < 1.5 is due to decreasing transiting probability and incompleteness to longer period events (>150 d) as our sample is based on Q1-Q8 photometry (∼ 2 years). As noted by Latham et al. (2011), there is a lack of hotjupiters in multi-planet systems verified in Figure 3 as a deficit of planets with S > 200 and R_p > 7 R_⊕ relative to the single planet population.

The FP tests presented in §5 are not sensitive to most hierarchical blends. A hierarchical blend is a bound stellar binary with a transiting planet orbiting one of the stellar components. It is not known if widely separated binaries host planetary systems with orbital planes aligned with the stellar orbital plane. If the alignment distribution is isotropic, then hierarchal, transiting triples in the multis may be rare, however, if alignment is common, say because of star-planet formation processes that favor aligned systems, then the rate of hierarchal, transiting triples could be much larger. For an isotropic distribution it was shown in §5 of Paper II that 4 or 5 systems are likely to have a planet candidate around each stellar component and it is very unlikely that there is more than 1 hierarchical triple multi (3 bound stars, one hosting a transiting planet and the other 2 in a eclipsing configuration). If the orbital planes of planets around both components of a stellar binary are aligned then we might expect to find a greater number of blends. In Appendix A, we develop a synthetic population model to test whether hierarchical blends could contribute a large fraction of the observed multi-planet population by comparing the measured value of ρ_⋆ from our transit models. We find that the multi-planet population is not dominated by hierarchical blends, but the strongest constraints come from KECK HIRES observations to search for spectroscopic blends (§8.1 of Paper II). Together, it appears the rate of hierarchical

– 30 –

blends is low. It is important to note that even if any of our validated planets are found to be orbiting a fainter and bound star, they are still planets; however, the stellar parameters listed in Table 2 will need to be revised.

The single and multi-planet populations also appear to have different fractions of planets at longer orbital periods. The relative cumulative distribution of the multiple planet systems overtakes the single planet populations at a period of ∼25 days. There are 1027 and 897 single and multi-planet candidates with periods between 5 and 150 days. If we separate these samples into short periods, 5-25 day, and long periods, 25-150 days, we find 689 and 627 short period planets and 338 and 270 long period planets for the single and multiplanet populations respectively. Thus, 55% of the multi-planet sample are found in the short period bin compared to 45% for the single planet sample. Explaining this difference seems counterintuitive, as alignment of orbital planes in multi-planet systems would make it more likely to find longer period planets relative to the single planet population under the assumption that long period planets are equally common in multi and single planet systems. However, there are strong biases in the detection process that generates the raw KOI list. In particular the candidates are found via different numerical and inspection methods. For example, there are a number of long period single-transit candidates that were found through identification of a single transit event and then the candidate was continuously monitored for additional transits.

6.1. New Planetary Systems with Planets In or Near the Habitable Zone

We discuss herein, validated multiple planet systems that contain a planet that is in the nominal habitable zone of their star. The location of the habitable zone depends on stellar luminosity (and the orbital period range also depends on stellar mass), so we introduce only those planets whose host stars have been characterized spectroscopically in this section.

As we do not have information regarding either the albedo or atmospheric characteristics of these planets (nor of any moons that they might have), we can only make reasonable estimates of the flux of stellar radiation that they intercept, i.e., the amount of insolation that they receive. We therefore quote results in terms of the average solar flux intercepted by Earth, S, which is generally referred to as the solar constant. For the purposes of our tabulation, we list objects that intercept flux less than 1.5 S (comparable to the flux Venus received 1 billion years ago, see (Kopparapu et al. 2013) and references therein). For comparison, Venus receives 1.91 S. We don’t specify an outer boundary to the HZ because few of the Kepler planets that we have validated have significantly smaller insolation than does Earth, but note that Mars receives an average of 0.43 S. Orbital eccentricity, e, which

– 31 –

generally is unknown, affects the flux of stellar radiation that a planet receives, but the change that it induces in the annual average insolation is roughly quadratic in e, and as few of the planets in Kepler’s multis have large eccentricities, the magnitude of the change in mean insolation resulting from planetary eccentricity is likely to be small. The spectrum of stellar radiation received by a planet also affects atmospheric and surface temperatures (Kasting, Whitmire & Reynolds 1993), but these variations are small compared to uncertainties in estimated insolation and in atmospheric properties. Nonetheless, we note the effective temperatures of the stellar hosts to aid in investigations by other researchers. Only six of the planets that we validate intercept less than 150% of the radiation flux encountered by Earth. Two of these orbit KOI-701 (Kepler-62) and have been analyzed in detail by Borucki et al. (2013). The transits for the four new planets that receive less than 1.5 S, KOI-518.03 (Kepler-174 d), 1422.04 (Kepler-296 f) (see Paper II for more detailed discussion), 1430.03 (Kepler-298 d) and 1596.02 (Kepler-309 c), are shown in Figure 4. The planets have nominal radii of 2.19, 1.79, 2.50 and 2.51 R_⊕.

6.2. Conclusions

Our work provides a substantial increase in the number of verified exoplanetary systems and demonstrates the ability of the Kepler mission to probe the statistics of exoplanetary systems with a sample that is relativity clean of FPs. Both transit models and centroid models are used to characterize the photometric data and various tests were used to identify FPs. The rate of FPs was found to be low relative to the single transiting planet population, in quantitative agreement with theory (Papers I and II). This result demonstrates that 851 planet candidates in multi-planet systems are valid planets at greater than the 99% level. In Appendix A, the multi-planet population was used to investigate the rate of hierarchical blends in multi-planet systems; while no limits on the occurrence rate can be currently set, it was found that the eccentricity distribution of transiting multi-planet systems found by Kepler is significantly different from the planetary distribution found by RV surveys. The list of validated planets presented is reliable, but the sample suffers from both incompleteness and strong biases. Many of the candidates that were not validated in this study are still excellent planetary candidates.

Funding for this Discovery mission is provided by NASA’s Science Mission Directorate. We are indebted to the entire Kepler Team for all the hard work and dedication have made such discoveries possible. JFR is partially supported by a Kepler Participating Scientist grant (NNX12AD21G).

– 32 –

REFERENCES Adams, E. R., et al. 2012, AJ, 144 42 Adams, E. R., et al. 2013, AJ, 146 9 Agol, E., et al. 2013, in preparation Akeson, R.L., Chen, X., Ciradi, D., et al. 2013, astroph 1307.2944v1 Barclay, T., Huber, D., Rowe, J.F., et al. 2013, ApJ, 761, 53 Batalha, N.M., Rowe, J.F., Gilliland, R.L. et al. 2010, ApJ, 713, 103 Batalha, N.M., Borucki, W.J., Bryson, S.T. et al. 2011, ApJ, 729, 27 Batalha, N.M., Rowe, J.F., Bryson, S.T. et al. 2013, ApJS, 204, 24 Borucki, W.J., Koch, D.G., Basri, G. et al. 2011, ApJ, 736, 19 Borucki, W. J., et al. 2013, Science 340, 587 Brown, T.M., Latham, D.W., Everett, M.E., Esquerdo, G.A. 2011, AJ, 142, 112 Bruntt, H., Basu, S., Smalley B. et al. 2012, MNRAS, 423, 122 Bryson, S.T., et al. 2013, PASP, 125, 930 Bryson, S.T., Morton, T.D., 2013, in preparation Buchhave, L.A., Latham, D.W., Johansen, A. et al. 2012, Nature, 486, 375 Burke, C. et al. 2013, ApJ, 210, 19 Carter, J.A., Agol, E. 2013, ApJ, 765, 132 Claret, A., Bloemen, S. 2011, A&A, 529, 75 Coughlin, J. et al. 2013 in preparation Demarque, P., Woo, J-H., Kim, Y-C., Yi, S.K. 2004, ApJS, 155, 667 Ford, E.B. 2005, AJ, 129, 1706 Ford, E.B., Rowe, J.F., Fabrycky, D.C., et al. 2011, ApJS, 197, 2 Fressin, F., Torres, G., Rowe, J.F. et al. 2012, Nature, 482, 195

– 33 –

Freesin, F., Torres, G., Charbonneau, D., et al. 2013, ApJ, 766, 81 Gautier, T.N., Charbonneau, D., Rowe. J.F. et al. 2012, ApJ, 749, 15 Gregory, P.C. 2011, MNRAS, 410, 94 Huber, D., Chaplin, W.J., Christensen-Dalsgaard, J. 2013, ApJ, 767, 127 Jenkins, J.M., Caldwell, D.A., Borucki, W.J. 2002, ApJ, 564, 495 Kasting, J.F., Whitmire, D.P., Reynolds, R.T. 1993, Icarus, 101, 108 Kipping, D. 2013, astroph 1306.4982v1 Kopparapu, R.k., Ramirez, R., Kasting J.F. et al. 2013, ApJ, 765, 131 Latham, D.W., Rowe, J.F., Quinn, S.N. et al. 2011, ApJ, 732, 24 Lissauer, J.J., Ragozzine, D., Fabrycky, D.C.. et al. 2011, ApJS, 197, 8 Lissauer, J.J., Marcy, G.W., Rowe, J.F. et al. 2012, ApJ, 750, 112, Paper I Lissauer, J.J., Marcy, G.W., Bryson, S.T. et al. 2013, ApJ, this issue, Paper II Mandel, K., Agol, E. 2002, ApJ, 580, 171 Marcy, G. W., et al. 2008, Physica Scripta, 130, 14001 Marcy, G.W., Issacson, H., Howard, A. et al. 2013, ApJ, 210, 20 Matijevic, G., Prsa, A., Orosz, J. et al. 2012, AJ, 143, 5 Mazeh, T., Nachmani G., Sokol, G. et al. 2013, A&A, 541, 56 More, J.J, Garbow, B.S., Hillstrom, K.E., User Guide for MINPACK-1, Argonne National Laboratory Report ANL-80-74, Argonne, Ill., 1980 Morton, T.D., Johnson, J.A. 2011, ApJ, 738, 170 Petigura, E. A., Marcy, G. W. & Howard, A. 2013, ApJ, 770, 69 Plavchan, P., Bilinski, C., Currie, T. 2012, astrph 1203.1887 Pinsonneault, M.H., An. D., Molenda-Zakowicz, J. et al. 2012, ApJS, 199, 30 Raghavan, D., McAlister, H.A., Henry, T.J. et al. 2010, ApJS, 190, 1

– 34 –

Rowe, J.F., Matthews, J.M., Seager, S. et al. 2006, ApJ, 646, 1241 Santerne, A., Fressin, F., Diaz, R. et al. 2013, A&A, 557, 139 Seager. S., Mallen-Ornelas 2003, ApJ, 585, 1038 Steffen, J.H., Fabrycky, D.C., Ford, E.B. et al. 2012, MNRAS, 421, 2342 Thompson, S.E., Everett, M., Mullally, F. et al. 2012, ApJ, 753, 86 Tingley, B., Bonomo, A.S., Deeg, H.J., 2011, ApJ, 726, 112 Torres, G., Fressin, F., Batalha, N.M., et al. 2011, ApJ, 727, 24 Torres, G., Fischer, D.A., Sozzetti, A., et al. 2012, ApJ, 757, 161 Trimble, V. 1990, MNRAS, 242, 79 Valenti, J.A., Piskunov, N. 1996, A&AS, 118, 595 Walker, G.A.H., Croll, B., Matthews, J.M. et al. 2008, A&A, 482, 691 Weiss, L.M., Marcy, G.W., Rowe, J.F. et al. 2013, ApJ, 768, 14 Wright, T. et al. 2011, PASP, 123, 412

A. Rate of False Multis from Transit Durations The FP tests presented in §5 are not sensitive to all types of hierarchical blends. We consider a hierarchical blend to be a gravitationally bound stellar binary with a transiting planet orbiting one of the stellar components. In this section we lay out the framework for estimating the number of blends in the Kepler multi-planet sample. Our aim was to set limits on the rate of hierarchical blends, which could be a large source of error in the Kepler exoplanet database. We present two types of analysis: 1. comparison of measured values of ρ_c for each planet pair within a multi-planet candidate system. 2. comparison of ρ_c to ρ_⋆ derived from stellar theory.

Our transit models provide a measurement of ρ_c, which is the measurement of the mean stellar density, ρ_⋆ if the transiting planet travels on a circular orbit. The value of ρ_c is

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 35 –

strongly correlated to the transit duration, which in turn depends on the planet’s semi-major axis and the impact parameter for a circular orbit. Each transiting planet in a hypothetical planetary system with planets in perfect circular orbits will produce the same measurement of ρ_c. Variations in the measured value of ρ_c can be produced in three ways: (1). Eccentric orbits change the transit duration depending on the star-planet separation at the time of the transit in accordance with Kepler’s Second Law. Comparison of a population of transits provides some insight on the eccentricity distribution because ρ_c and ρ_⋆ will differ. (2). Unresolved, gravitationally-bound stars that host transiting planets that have diluted transits as both stars are observed within the same photometric aperture. The unseen companion is fainter and, generally, smaller relative to the target star. Thus, hierarchical triples produce systematically larger values of ρ_c. When the planet system is bound to the fainter star, the measurement of ρ_c can disagree with the estimate of ρ_⋆ from stellar classification and modeling. If transiting planets are found around both components of the stellar binary, then ρ_c will not agree planet to planet. (3). Measurement error introduces scatter that produces ρ_c values that are equally too small or large. The population of Kepler multi-planet systems was used to place limits on the rate of hierarchal blend occurrences as described below.

The difference between values of ρ_c for each KOI was computed for each planet candidate in the system. For example, if a system has 3 planets (P1, P2 and P3), then we would compare the difference in ρ_c based on P1-P2, P1-P3 and P2-P3 relative to the sum of ρ_c for each pair, dρ_{c,i−j} = | | | | ρ_{c,i} − ρ_{c,j} ρ_{c,i} + ρ_{c,j} | | | | . (A1) Since the distribution is symmetric, we used the absolute value. The binned distribution of dρ_{c,i−j} measurements is shown in black in Figure 5. The sample included 1158 planet candidates after the removal of FAs, FPs and P/T0 collisions. The observed distribution is broad but peaked towards zero. The next step was to construct a synthetic population to reproduce the observed distribution that accounted for eccentricity, binarity and measurement error.

A.1. Constructing Synthetic Populations

To construct a synthetic population, ρ_⋆ for the primary star was adopted from Table 2 and matching orbital periods for the orbiting planets from Table 3. Thus, a synthetic transiting planet is generated for each planet in our transiting multi-planet sample. A coeval binary companion is generated for each star and later we decide whether the primary or secondary component is hosting the planet. The companion is not used to estimate the binary fraction, but to determine the change in ρ_c and estimate the number of hierarchical blends.

– 36 –

A hierarchical blend occurs when transiting planets are observed around both components of a stellar binary. Masses for a bound companion (M_2) were chosen to be greater than 0.1 M_⊙ and less than the primary (M_1) and have a mass-ratio (q) distribution,

N(q) ∝ q^n, (A2)

where n=-1 would produce a 1/q distribution matching the distribution observed in radial velocity surveys (Trimble 1990). The transit depth from Table 3 together with an estimate of the luminosity of the primary (L_1) and secondary (L_2) stellar components was used to check that the undiluted transit-depth around the fainter secondary star would not exceed 50%. This sets a lower limit on the luminosity of the secondary,

L_{2,min} = 2L_1T_{dep}, (A3)

where T_{dep} is the transit depth from Table 3. If L_2 < L_{2,min}, then we choose another mass for the stellar companion and repeated until a suitable choice is found for this check. To determine which stellar component the planet would be orbiting in our model, a fitted parameter, binfrac, was used to represent the fraction of planets that are orbiting the fainter, bound companion. For each transiting planet in the system we drew a uniform random number. If that number was less than binfrac then we adopted ρ_⋆ of the bound companion.

A system has now been constructed that consists of two bound stars, each having a probability of having a transiting planet. To account for eccentricity in the synthetic population, a two-parameter model of the eccentricity distribution based on the beta function, as described in Kipping (2013), was adopted,

P_β = 1 β(x, y) e^{x−1}(1 − e)^{y−1}, (A4)

where e was the eccentricity of the planet and x and y were fitted parameters. Other distributions, such as a Rayleigh distribution, could also be used to produce similar results. The distribution P_β was used to draw a value of e for each transiting planet. With the orbital period and ρ_⋆ selected, a/R_⋆ was calculated using Equation (1). The argument of periapsis (ω) was then randomly selected from a uniform distribution and used to determine the star-planet separation, d/R_⋆, during transit. The transit probability was then calculated, T_{prob} = R_⋆ d , (A5)

and a uniform random number from 0 to 1 was drawn. If the random number was greater than T_{prob} then the choice of ω was rejected and a new value was drawn and the exercise

– 37 –

repeated. This process insures that transits occurring near periastron are preferred. The estimate of d/R_⋆ was substituted in Equation (1) to estimate ρ_c, ( d R_⋆ )_3 ≃ ρ_cGP^2 3π . (A6)

Measurement error was incorporated by choosing a model solution from the MCMC analysis for the corresponding KOI and comparing ρ_c to the median value of ρ_c from all the chains. The difference was added to the synthetic value of ρ_c. To investigate the dependance of the synthetic model on reliability of estimating uncertainties in transit parameters, we used a nuisance parameter, errfrac, to scale the errors on ρ_⋆ as measured by the transit when assuming a circular orbit.

A.2. Results

In Figure 5 we plot the binned distribution of dρ_{c,i−j} based on various synthetic populations for comparison to the observations. The cyan line shows a population of planets with only circular orbits and no hierarchical blends; only incorporating measurement error. This model does not match the observations shown in black. The red line was produced by incorporating measurement error and an eccentric distribution of planets from radial velocity planets (Wright et al. 2013) with best fit parameters from Kipping (2013). This model produced a better fit, but not an ideal fit to the observations. The green line shows a population produced using measurement error, circular orbits and a hierarchical blend rate of 0.5 and N(q) ∝ q^{−1}. In this scenario half of the planets are transiting primarily low mass stellar companions. The blue line shows a population with circular orbits and a hierarchical blend rate of 0.5 and a uniform distribution of q. For both cases with hierarchical blends we see an overabundance of mismatches in ρ_c between planet pairs, with the strength of the mismatches modulated by the distribution of q.

To measure posterior distributions of the parameters to describe the planet population we use a MCMC routine that uses methods similar to the description found in §4.1. In Figure 6 we show distributions for binfrac, n, a, b and errfrac based on 48 000 chains. Parameters where restricted to binfrac={0,0.5}, n={-2:2}, a,b={0,10} and errfrac > 0. It is immediately clear that posterior distributions for each fitted parameter are quite broad, but we can draw a few conclusions.

An extensive search for blended companions based on KECK high-resolution spectra was described in §8.1 of Paper II. The sample included 270 multi-planet candidate systems and would be sensitive to blends due to companions that are 2-3% as bright as the companion

– 38 –

and show a RV difference of ∼ 10 km/s. From this sample, only 1 clear blend was found and in that case (KOI-2311.02) the S/N of the transit was found to very low, so we do not even consider that system to be a multi-planet candidate. However, based on the one potential blend detection an estimate of the blend rate is 0.004 ± 0.004 for companion stars that are 2-3% as bright as the primary. Beyond ∼ 5 AU, the RV component of the stellar binary will be too small to allow reliable detection of stellar blends, which would account for less than half of companions found in solar-type stars (Raghavan et al. 2010). We double the potential blend rate and take the 3-sigma upper limit to get a rough estimate of the number of hierarchical blends that could exist. The synthetic population has 1158 planets in 460 systems, so observations suggest that no more than 14 blended systems could exist and either be missed by the spectroscopic survey or have separations large enough that a companion would not be detected. The inclusion of high resolution imaging observations would allow additional constraints on the number of companions detected at large separations. In Figure 6, all simulations that have less than 14 blended systems (e.g., at least one planet around each stellar component) have been marked in red.

The rate of hierarchical blends, binfrac, was found to be dependent on how well uncertainties are determined for ρ_c. The transit model used a fixed set of limb-darkening parameters, thus we expect our uncertainties to be both underestimated and potentially systematically biased. We do not expect our uncertainties to be under-estimated. There is weak (2 σ) evidence that there are zero hierarchical blends in our sample based on the measurement uncertainties in Table 3. Limits on the blend rate from spectroscopic analysis also suggests that the uncertainties on ρ_c have been underestimated.

The eccentricity distribution as parameterized by Equation (A4) is relatively independent of binfrac, errfrac and n. Figure 7 shows the range of allowed eccentricity distributions in black based on the synthetic populations from the MCMC analysis with 1 σ uncertainties. The blue line shows the eccentricity distribution based on RV surveys (Wright et al. 2013) based on an analysis by Kipping (2013). A chi-square test of the two distributions gives χ^2 = 46.2 for 10 samples, which indicates that the two distributions are different with high confidence. The multi-planet eccentricity distribution is more sharply peaked towards zero, thus high-eccentric planets in multi-planet systems are relativity rare compared to the RV sample. It would be interesting to further break down the RV sample to compare the eccentricity distributions of single and multi-planet samples, but it outside the scope of the initial analysis presented here.

The difference in ρ_c when hierarchical blends are present will be strongly dependent on probability distribution of the underlying mass function. As shown in Figure 5, the distribution of dρ_{c,i−j} will contain an increased number of large mismatches as n decreases.

– 39 –

In the case of equal or nearly equal-mass binaries the difference in ρ_c will be indistinguishable from measurement error. The synthetic population model shows that as errfrac is reduced, n pushes towards large values that produce a large number of equal mass binaries. For errfrac=1, there is no strong measurement of the mass fraction distribution.

The value of ρ_c can also be directly compared to ρ_⋆ (i.e. Tingley, Bonomo & Deeg 2011) from Table 2. Eccentric planets will be seen when the transit occurs close to pericenter, which decreases the transit duration relative to a circular orbit. This pushes ρ_c towards larger values (a denser star). As stated above, hierarchical blends will also produce a bias towards larger values of ρ_c as Kepler planet host stars are typically close to the mainsequence. Measurement error should not introduce any bias. A comparison of ρ_⋆ and ρ_c in a similar manor to the comparison of ρ_c for planet pairs could be carried out, but a strict requirement is that ρ_⋆ is a good estimate of the true mean-stellar density, which is not true. In particular, the use of Yale-Yonsei evolution models are known to produce radii too large and hence, densities that are systematically too small for low mass stars (Plavchan et al. 2012). However, when ρ_⋆ is based on asteroseismology (Huber et al. 2013), such biases are likely better controlled. Figure 8 shows the difference in ρ_⋆ and ρ_c scaled by the uncertainty versus ρ_⋆. The asteroseismology sample is limited to solar-like and evolved stars as the amplitudes of p-mode oscillations scale proportionally to stellar luminosity. The bias towards smaller values of ρ_⋆ for low mass stars with ρ_⋆ based on Yonsei-Yale models can be seen for stars with ρ_⋆ > 3 g cm^{−3}. From this small sample, there is evidence of a bias of ρ_c being larger that ρ_⋆; however, the sample is too small to draw any inferences on the underlying eccentricity and hierarchical blend population.

Currently, the sample of multi-planet systems and well characterized stars is too small to draw strong conclusions about the number of hierarchical blends. The strongest constraints currently come from observations that attempt to directly detect a nearby companion that may be gravitationally bound. When additional multi-planet candidates and observations become available, model fits can be repeated to determine the rate of hierarchical blends and in turn, establish whether orbital planes in binary stars systems are aligned.

B. List of symbols and abbreviations

• M_J, R_J – mass and radius in Jupiter units

• S/N – signal-to-noise ratio.

• KOI – Kepler Object of Interest

• FA – False-alarms are candidates with a S/N < 7.1

– 40 –

• FP – Astrophysical False-positive • P/T0 – Period/T0 collision False-positive produced by the instrument • PC – planetary candidate • EB – eclipsing binary • BEB - background eclipsing binary • S - ratio of incident flux relative to the Earth. • ρ_⋆ – mean stellar density • ρ_c — transiting derived mean stellar density for circular orbits

– 41 –

Table 1. Multiplanet Counts

S1 M1 2 3 4 5 6 # Multi-pl # new Muti-pl Cuts

2527 0 313 107 45 13 3 1210 1092 No Cuts 2482 17 300 104 43 13 3 1167 1049 FA 2161 21 295 102 43 13 3 1151 1033 FA,Col 1861 27 293 100 42 10 3 1122 1011 FA,Col,P 1496 24 284 102 43 13 3 1129 1011 FA,Col,FPs 1377 29 285 100 42 10 3 1106 995 FA,Col,FPs,P 1492 32 279 100 43 13 2 1107 989 FA,Col,FPs,SN 1366 41 273 98 40 13 2 1077 964 FA,Col,FPs,SN,b 1374 37 281 96 43 10 2 1084 973 FA,Col,FPs,SN,P 1257 46 272 96 40 10 2 1054 947 FA,Col,FPs,SN,P,b – 66 236 81 32 12 1 909 821 FA,centr – 66 236 81 32 12 1 909 821 FA,Col,centr – 67 235 81 32 12 1 907 819 FA,Col,FP,centr – 67 235 81 33 11 1 906 818 FA,Col,FP,centr,SN – 72 233 79 34 9 1 890 803 FA,Col,FP,centr,SN,P – 79 227 78 32 9 1 867 784 FA,Col,FP,centr,SN,P,b – 83 221 78 31 9 1 851 768 Dynamical and SP Cuts

Note. — Number of Mulitplanet Systems after various cuts. See §5.9 for detailed definition of the cuts.

– 42 –

Table 2. Stellar Parameters

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

41 Kepler-100 6521045 5825 75 4.125 0.045 0.02 0.10 1.490 0.035 0.457 0.013 5 3 46 Kepler-101 10905239 5570 134 4.065 0.240 0.30 0.10 1.666 0.415 0.351 0.300 3 4 70 Kepler-20 6850504 5443 74 4.398 0.100 0.00 0.07 0.986 0.095 1.304 0.400 4 3 72 Kepler-10 11904151 5627 44 4.342 0.046 -0.15 0.04 1.056 0.021 1.068 0.008 5 3 82 Kepler-102 10187017 4908 74 4.640 0.100 0.08 0.07 0.716 0.032 3.132 0.304 4 3 85 Kepler-65 5866724 6169 50 4.236 0.035 0.09 0.08 1.424 0.024 0.621 0.011 5 3 89 8056665 6688 342 4.059 0.150 -0.21 0.10 1.773 0.357 0.329 0.186 3 3 94 Kepler-89 6462863 6184 83 4.196 0.068 0.11 0.07 1.486 0.139 0.543 0.127 4 3 102 8456679 5705 100 4.311 0.150 0.18 0.10 1.199 0.219 0.867 0.419 3 3 108 Kepler-103 4914423 5845 88 4.162 0.051 0.07 0.11 1.436 0.039 0.513 0.020 5 3 111 6678383 5711 74 4.105 0.100 -0.55 0.07 1.349 0.223 0.485 0.355 4 3 112 10984090 5834 100 4.367 0.150 -0.11 0.10 1.087 0.205 1.080 0.469 3 3 115 9579641 5873 100 4.305 0.150 -0.19 0.10 1.160 0.245 0.879 0.471 3 3 116 Kepler-106 8395660 5865 116 4.408 0.200 -0.12 0.12 1.032 0.297 1.271 0.508 4 3 117 Kepler-107 10875245 5851 75 4.196 0.055 0.27 0.10 1.411 0.047 0.581 0.049 5 3 119 Kepler-108 9471974 5854 92 3.895 0.076 0.31 0.11 2.192 0.121 0.188 0.024 5 3 123 Kepler-109 5094751 5952 75 4.211 0.051 -0.08 0.10 1.323 0.037 0.641 0.032 5 3 124 Kepler-110 11086270 5960 153 4.327 0.150 -0.19 0.10 1.149 0.228 0.930 0.434 3 3 137 Kepler-18 8644288 5385 74 4.401 0.100 0.20 0.07 1.008 0.108 1.282 0.390 4 3 139 Kepler-111 8559644 5952 74 4.377 0.100 0.28 0.07 1.157 0.143 1.057 0.253 4 3 148 Kepler-48 5735762 5190 74 4.416 0.100 0.17 0.07 0.953 0.060 1.404 0.340 4 0 150 Kepler-112 7626506 5544 148 4.506 0.150 -0.42 0.10 0.841 0.203 1.939 0.700 3 3 152 Kepler-79 8394721 6189 100 4.223 0.150 -0.04 0.10 1.403 0.252 0.610 0.309 3 3 153 Kepler-113 12252424 4725 74 4.597 0.200 0.05 0.07 0.711 0.028 2.853 0.323 4 3 156 Kepler-114 10925104 4605 100 4.650 0.150 0.09 0.10 0.667 0.035 3.458 0.404 3 3 157 Kepler-11 6541920 5685 116 4.298 0.200 -0.00 0.12 1.159 0.341 0.879 0.500 4 3 159 Kepler-115 8972058 5979 132 4.306 0.150 -0.10 0.10 1.205 0.230 0.851 0.400 3 4 168 Kepler-23 11512246 5828 100 4.091 0.057 -0.05 0.10 1.548 0.048 0.410 0.023 5 3 171 Kepler-116 7831264 6142 100 4.196 0.150 0.02 0.10 1.454 0.273 0.555 0.293 3 4 191 5972334 5421 100 4.488 0.150 0.01 0.10 0.902 0.129 1.744 0.467 3 3 199 10019708 6474 200 4.367 0.300 0.10 0.50 1.234 0.496 0.969 0.289 1 1 209 Kepler-117 10723750 6169 100 4.187 0.150 -0.04 0.10 1.471 0.278 0.534 0.329 3 3 216 Kepler-118 6152974 5274 200 4.321 0.300 0.18 0.50 1.094 0.489 0.984 0.674 1 1 220 Kepler-119 7132798 5595 200 4.567 0.300 -0.08 0.50 0.839 0.319 2.254 0.820 1 1

– 43 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

222 Kepler-120 4249725 4096 150 4.732 0.200 -0.17 0.15 0.534 0.028 5.177 0.514 1 1 223 Kepler-121 4545187 5311 200 4.646 0.300 -0.38 0.50 0.701 0.380 3.240 1.083 1 1 232 4833421 6050 137 4.299 0.150 -0.16 0.10 1.216 0.239 0.826 0.400 3 3 238 Kepler-123 7219825 6089 121 4.277 0.150 -0.14 0.10 1.264 0.243 0.758 0.379 3 4 241 Kepler-124 11288051 4984 100 4.669 0.150 -0.45 0.10 0.636 0.030 3.768 0.418 3 0 244 Kepler-25 4349452 6270 79 4.278 0.037 -0.04 0.10 1.309 0.023 0.745 0.009 5 3 245 Kepler-37 8478994 5417 75 4.567 0.065 -0.32 0.07 0.772 0.026 2.458 0.046 5 3 246 Kepler-68 11295426 5793 74 4.282 0.033 0.12 0.07 1.243 0.019 0.790 0.005 5 3 248 Kepler-49 5364071 4252 100 4.727 0.150 -0.12 0.10 0.559 0.021 4.904 0.364 3 0 250 Kepler-26 9757613 4486 116 4.733 0.200 -0.21 0.10 0.571 0.027 4.859 0.445 4 3 251 Kepler-125 10489206 3810 150 4.744 0.200 -0.02 0.15 0.512 0.021 5.555 0.423 1 1 253 11752906 3769 150 4.733 0.200 0.40 0.15 0.530 0.017 5.233 0.333 1 1 260 Kepler-126 8292840 6239 94 4.247 0.036 -0.14 0.10 1.358 0.024 0.665 0.005 5 3 262 Kepler-50 11807274 6225 75 4.138 0.042 -0.00 0.08 1.584 0.031 0.441 0.004 5 3 270 6528464 5588 99 4.091 0.043 -0.10 0.10 1.467 0.033 0.439 0.016 5 0 271 Kepler-127 9451706 6106 106 4.265 0.051 0.33 0.10 1.359 0.035 0.697 0.023 5 3 274 Kepler-128 8077137 6072 75 4.071 0.047 -0.09 0.10 1.659 0.038 0.365 0.007 5 3 275 Kepler-129 10586004 5770 83 4.086 0.060 0.29 0.10 1.641 0.051 0.370 0.015 5 3 277 Kepler-36 11401755 5911 66 4.045 0.028 -0.20 0.06 1.626 0.019 0.351 0.006 5 3 279 12314973 6215 89 4.175 0.075 0.28 0.10 1.570 0.085 0.478 0.064 5 0 282 Kepler-130 5088536 5884 75 4.304 0.053 -0.22 0.10 1.127 0.033 0.927 0.053 5 3 283 Kepler-131 5695396 5687 74 4.403 0.100 0.12 0.07 1.047 0.128 1.242 0.356 4 3 284 Kepler-132 6021275 6003 146 4.310 0.150 -0.20 0.10 1.178 0.229 0.875 0.421 3 0 285 6196457 5871 94 4.057 0.054 0.17 0.11 1.703 0.048 0.342 0.011 5 3 291 Kepler-133 10933561 5736 100 4.186 0.150 0.25 0.10 1.425 0.236 0.559 0.310 3 3 295 Kepler-134 11547513 5983 150 4.310 0.150 -0.19 0.10 1.176 0.228 0.882 0.427 3 3 298 12785320 5750 – 4.5 – 0.0 – 1.0 – – – -1 0 301 Kepler-135 3642289 6090 120 4.271 0.150 -0.14 0.10 1.275 0.244 0.743 0.374 3 3 304 6029239 5736 116 4.407 0.150 -0.23 0.10 0.998 0.200 1.298 0.549 3 3 307 6289257 6023 153 4.305 0.150 -0.17 0.10 1.197 0.234 0.857 0.410 3 0 312 Kepler-136 7050989 6165 100 4.244 0.150 -0.07 0.10 1.355 0.248 0.659 0.329 3 3 313 Kepler-137 7419318 5187 100 4.553 0.150 -0.05 0.10 0.802 0.056 2.297 0.391 3 3 314 Kepler-138 7603200 4079 238 4.747 0.150 -0.20 0.10 0.528 0.036 5.436 0.645 3 3 316 Kepler-139 8008067 5594 100 4.247 0.150 0.30 0.10 1.300 0.251 0.695 0.397 3 3

– 44 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

321 8753657 5538 74 4.302 0.100 0.18 0.07 1.160 0.168 0.888 0.334 4 3 327 Kepler-140 9881662 6077 136 4.272 0.150 -0.07 0.10 1.288 0.244 0.733 0.360 3 3 338 Kepler-141 10552611 4910 100 4.566 0.150 0.23 0.10 0.787 0.044 2.410 0.350 3 0 339 10587105 6074 123 4.285 0.150 -0.15 0.10 1.245 0.237 0.781 0.382 3 4 341 10878263 5421 100 4.485 0.150 0.05 0.10 0.910 0.130 1.716 0.455 3 0 343 Kepler-142 10982872 5790 100 4.262 0.150 0.06 0.10 1.269 0.245 0.735 0.410 3 3 351 Kepler-90 11442793 6015 100 4.215 0.150 0.07 0.10 1.406 0.262 0.597 0.316 3 3 352 Kepler-143 11521793 5848 168 4.202 0.170 -0.05 0.10 1.359 0.320 0.599 0.412 3 3 353 11566064 6199 117 4.079 0.190 -0.07 0.10 1.692 0.378 0.356 0.254 3 3 369 Kepler-144 7175184 6075 131 4.289 0.150 -0.16 0.10 1.235 0.237 0.799 0.386 3 3 370 Kepler-145 8494142 6144 106 4.024 0.055 0.13 0.10 1.850 0.050 0.295 0.007 5 3 376 12643589 6682 200 4.369 0.300 -0.27 0.50 1.211 0.537 0.990 0.265 1 1 377 Kepler-9 3323887 5777 85 4.499 0.100 0.12 0.07 0.965 0.095 1.678 0.302 4 1 379 2446113 6079 100 4.099 0.150 0.13 0.10 1.674 0.329 0.388 0.229 3 0 386 Kepler-146 3656121 5948 100 4.312 0.150 -0.02 0.10 1.208 0.226 0.857 0.399 3 3 392 Kepler-147 3942670 6012 100 4.182 0.150 0.08 0.10 1.468 0.289 0.532 0.299 3 4 398 Kepler-148 9946525 5272 200 4.546 0.300 0.14 0.50 0.851 0.413 2.120 0.874 1 1 401 Kepler-149 3217264 5381 100 4.465 0.150 0.27 0.10 0.953 0.136 1.562 0.436 3 3 408 Kepler-150 5351250 5560 100 4.466 0.150 -0.02 0.10 0.939 0.136 1.596 0.463 3 3 413 Kepler-151 5791986 5460 200 4.555 0.300 -0.10 0.50 0.830 0.411 2.222 0.753 1 1 414 5872150 6085 200 4.409 0.300 0.01 0.50 1.093 0.543 1.206 0.361 1 1 416 Kepler-152 6508221 5088 100 4.605 0.150 -0.22 0.10 0.724 0.044 2.877 0.426 3 3 427 10189546 5472 200 4.509 0.300 -0.15 0.50 0.864 0.471 1.918 0.779 1 1 431 Kepler-153 10843590 5404 200 4.446 0.300 -0.26 0.50 0.892 0.537 1.605 0.886 1 1 433 10937029 5163 100 4.544 0.150 0.02 0.10 0.816 0.057 2.217 0.387 3 3 435 Kepler-154 11709124 5690 108 4.415 0.150 -0.11 0.10 1.001 0.190 1.323 0.511 3 4 438 Kepler-155 12302530 4508 100 4.684 0.150 -0.04 0.10 0.620 0.029 4.007 0.397 3 3 439 12470954 5397 100 4.463 0.150 0.25 0.10 0.955 0.140 1.549 0.441 3 3 440 Kepler-156 2438264 5094 100 4.552 0.150 0.08 0.10 0.807 0.053 2.288 0.365 3 4 442 Kepler-157 3745690 5774 125 4.389 0.150 -0.12 0.10 1.044 0.200 1.188 0.489 3 4 446 Kepler-158 4633570 4623 200 4.660 0.300 -0.23 0.50 0.624 0.079 3.770 1.003 1 1 448 Kepler-159 5640085 4625 100 4.653 0.150 0.04 0.10 0.663 0.034 3.496 0.401 3 3 456 Kepler-160 7269974 5857 200 4.510 0.300 -0.36 0.50 0.884 0.430 1.884 0.684 1 1 457 Kepler-161 7440748 5078 100 4.553 0.150 0.10 0.10 0.806 0.052 2.298 0.369 3 4

– 45 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

459 Kepler-162 7977197 5816 200 4.436 0.300 -0.30 0.50 0.958 0.509 1.463 0.609 1 1 464 8890783 5587 200 4.457 0.300 0.17 0.50 0.980 0.427 1.501 0.524 1 1 471 Kepler-163 10019643 5776 200 4.524 0.300 -0.02 0.50 0.917 0.380 1.868 0.649 1 1 474 Kepler-164 10460984 5888 113 4.331 0.150 -0.10 0.10 1.148 0.219 0.940 0.442 3 3 475 Kepler-165 10577994 5211 200 4.542 0.300 -0.31 0.50 0.770 0.467 2.319 1.070 1 1 481 Kepler-166 11192998 5413 200 4.619 0.300 -0.29 0.50 0.742 0.382 2.884 1.006 1 1 489 2576197 6522 200 4.322 0.300 0.28 0.50 1.343 0.439 0.802 0.250 1 1 490 3239945 4796 100 4.629 0.150 -0.02 0.10 0.696 0.037 3.143 0.391 3 3 497 Kepler-168 4757437 6282 200 4.422 0.300 -0.01 0.50 1.107 0.496 1.226 0.354 1 1 500 4852528 4613 74 4.690 0.060 0.07 0.07 0.637 0.022 3.955 0.285 4 3 505 5689351 4997 100 4.582 0.150 0.03 0.10 0.763 0.046 2.582 0.384 3 4 508 Kepler-170 6266741 5679 57 4.445 0.100 0.47 0.08 1.035 0.058 1.383 0.188 2 1 509 Kepler-171 6381846 5642 200 4.566 0.300 -0.15 0.50 0.839 0.376 2.252 0.662 1 1 510 Kepler-172 6422155 5526 100 4.375 0.150 0.26 0.10 1.085 0.191 1.099 0.454 3 0 511 Kepler-173 6451936 6031 200 4.404 0.300 -0.79 0.50 0.949 0.473 1.371 0.735 1 1 518 Kepler-174 8017703 4880 126 4.679 0.150 -0.43 0.10 0.622 0.032 3.956 0.450 3 3 519 Kepler-175 8022244 6064 200 4.472 0.300 -0.02 0.50 1.010 0.504 1.508 0.463 1 1 520 Kepler-176 8037145 5232 200 4.474 0.300 0.07 0.50 0.891 0.456 1.720 0.835 1 1 523 Kepler-177 8806123 6216 200 4.428 0.300 -0.09 0.50 1.077 0.557 1.277 0.369 1 1 528 Kepler-178 9941859 5676 200 4.334 0.300 -0.19 0.50 1.066 0.454 1.038 0.513 1 1 534 Kepler-179 10554999 5302 200 4.613 0.300 -0.14 0.50 0.759 0.307 2.768 0.988 1 1 542 Kepler-180 11669239 5731 200 4.343 0.300 -0.19 0.50 1.063 0.471 1.064 0.486 1 1 543 Kepler-181 11823054 5333 200 4.619 0.300 -0.16 0.50 0.749 0.367 2.846 0.996 1 1 546 Kepler-182 12058931 6250 200 4.401 0.300 0.08 0.50 1.146 0.512 1.127 0.314 1 1 549 3437776 5853 200 4.412 0.300 0.14 0.50 1.073 0.457 1.237 0.460 1 1 551 Kepler-183 4270253 5888 200 4.502 0.300 0.03 0.50 0.958 0.414 1.702 0.560 1 1 555 5709725 5245 74 4.414 0.060 0.03 0.07 0.949 0.059 1.403 0.272 4 3 564 6786037 5956 200 4.508 0.300 -0.20 0.50 0.938 0.481 1.763 0.558 1 2 567 Kepler-184 7445445 5788 200 4.510 0.300 -0.34 0.50 0.873 0.490 1.907 0.696 1 1 569 Kepler-185 8008206 5208 200 4.545 0.300 -0.05 0.50 0.806 0.460 2.228 0.982 1 1 571 Kepler-186 8120608 4048 256 4.750 0.150 -0.21 0.10 0.524 0.038 5.518 0.693 3 3 572 Kepler-187 8193178 6105 129 4.274 0.150 -0.08 0.10 1.287 0.247 0.740 0.358 3 4 573 Kepler-188 8344004 6021 200 4.346 0.300 -0.13 0.50 1.141 0.514 0.998 0.394 1 1 574 Kepler-189 8355239 5235 200 4.619 0.300 -0.13 0.50 0.750 0.376 2.839 0.974 1 1

– 46 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

579 Kepler-190 8616637 5106 100 4.561 0.150 0.03 0.10 0.795 0.049 2.366 0.372 3 4 582 Kepler-191 9020160 5282 200 4.594 0.300 0.01 0.50 0.789 0.390 2.560 0.920 1 1 584 Kepler-192 9146018 5479 100 4.428 0.150 0.24 0.10 1.007 0.164 1.346 0.453 3 4 590 Kepler-193 9782691 6335 200 4.403 0.300 -0.01 0.50 1.147 0.515 1.131 0.368 1 1 593 9958962 6015 200 4.470 0.300 0.01 0.50 1.011 0.414 1.496 0.515 1 1 597 Kepler-194 10600261 6089 200 4.415 0.300 -0.30 0.50 1.025 0.537 1.304 0.464 1 1 598 Kepler-195 10656823 5329 200 4.603 0.300 -0.05 0.50 0.775 0.284 2.655 0.895 1 1 601 10973664 6122 200 4.491 0.300 -0.18 0.50 0.972 0.457 1.640 0.499 1 1 612 Kepler-196 6587002 5128 100 4.566 0.150 -0.06 0.10 0.782 0.056 2.434 0.397 3 3 620 Kepler-51 11773022 6041 200 4.487 0.300 -0.08 0.50 0.982 0.468 1.606 0.499 1 2 623 Kepler-197 12068975 6004 102 4.304 0.053 -0.38 0.10 1.120 0.033 0.907 0.052 5 3 624 Kepler-198 3541946 5574 100 4.467 0.150 -0.02 0.10 0.940 0.139 1.601 0.463 3 4 638 Kepler-199 5113822 5644 117 4.438 0.150 -0.12 0.10 0.967 0.173 1.448 0.518 3 3 645 5374854 5928 129 4.306 0.150 -0.23 0.10 1.160 0.224 0.886 0.449 3 3 654 Kepler-200 5941160 5678 100 4.454 0.150 -0.17 0.10 0.944 0.158 1.546 0.511 3 3 655 Kepler-201 5966154 6065 117 4.294 0.150 -0.15 0.10 1.229 0.240 0.811 0.390 3 3 657 Kepler-202 6020753 4668 100 4.650 0.150 -0.00 0.10 0.667 0.034 3.448 0.395 3 4 658 Kepler-203 6062088 5821 100 4.358 0.150 -0.03 0.10 1.114 0.213 1.027 0.445 3 4 661 Kepler-204 6347299 5812 100 4.269 0.160 -0.03 0.10 1.238 0.263 0.767 0.445 3 4 663 Kepler-205 6425957 4321 100 4.735 0.150 -0.30 0.10 0.546 0.022 5.097 0.418 3 3 664 Kepler-206 6442340 5764 100 4.311 0.150 0.05 0.10 1.185 0.228 0.876 0.436 3 4 665 Kepler-207 6685609 5920 116 4.129 0.150 0.21 0.10 1.588 0.302 0.434 0.244 3 3 671 Kepler-208 7040629 6092 100 4.265 0.150 -0.02 0.10 1.314 0.243 0.711 0.343 3 3 672 Kepler-209 7115785 5513 100 4.472 0.150 0.04 0.10 0.935 0.138 1.622 0.457 3 0 676 Kepler-210 7447200 4559 100 4.663 0.150 0.07 0.10 0.650 0.033 3.642 0.403 3 3 678 Kepler-211 7509886 5123 100 4.547 0.150 0.09 0.10 0.816 0.054 2.226 0.368 3 3 679 Kepler-212 7515212 5852 100 4.182 0.150 0.17 0.10 1.455 0.272 0.534 0.308 3 3 691 8480285 5960 218 4.325 0.150 -0.27 0.10 1.131 0.220 0.951 0.462 3 4 692 Kepler-213 8557374 5696 100 4.310 0.150 0.15 0.10 1.195 0.223 0.868 0.426 3 4 693 Kepler-214 8738735 6169 100 4.249 0.150 -0.04 0.10 1.352 0.252 0.668 0.321 3 3 700 Kepler-215 8962094 5739 164 4.364 0.150 -0.38 0.10 1.027 0.236 1.144 0.605 3 4 701 Kepler-62 9002278 4925 70 4.670 0.067 -0.37 0.04 0.636 0.019 3.787 0.292 4 3 707 Kepler-33 9458613 5904 78 4.009 0.060 0.15 0.07 1.817 0.178 0.288 0.066 4 3 708 Kepler-216 9530945 6091 120 4.280 0.150 -0.14 0.10 1.260 0.243 0.767 0.379 3 3

– 47 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

710 9590976 6171 109 4.030 0.180 -0.12 0.10 1.799 0.256 0.306 0.228 3 3 711 9597345 5502 74 4.391 0.060 0.37 0.07 1.063 0.083 1.188 0.248 4 3 717 9873254 5669 100 4.235 0.150 0.32 0.10 1.338 0.228 0.657 0.360 3 0 718 Kepler-219 9884104 5786 100 4.157 0.150 0.26 0.10 1.491 0.249 0.500 0.285 3 3 719 Kepler-220 9950612 4632 100 4.652 0.150 0.05 0.10 0.666 0.034 3.462 0.401 3 3 720 Kepler-221 9963524 5243 100 4.543 0.150 -0.03 0.10 0.821 0.075 2.199 0.398 3 4 723 Kepler-222 10002866 5433 200 4.551 0.300 0.15 0.50 0.869 0.380 2.102 0.743 1 1 730 Kepler-223 10227020 5829 200 4.397 0.300 -0.21 0.50 1.017 0.438 1.258 0.548 1 1 732 10265898 5555 200 4.505 0.300 0.47 0.50 0.954 0.404 1.718 0.636 1 1 733 Kepler-224 10271806 5018 100 4.639 0.150 -0.33 0.10 0.676 0.038 3.324 0.437 3 3 734 10272442 5977 200 4.520 0.300 -0.13 0.50 0.921 0.356 1.844 0.554 1 1 736 Kepler-225 10340423 3682 150 4.783 0.200 -0.11 0.15 0.480 0.020 6.486 0.433 1 1 738 Kepler-29 10358759 5960 200 4.524 0.300 -0.23 0.50 0.914 0.458 1.878 0.543 1 1 749 Kepler-226 10601284 5571 200 4.586 0.300 -0.14 0.50 0.802 0.318 2.467 0.851 1 1 752 Kepler-227 10797460 5854 200 4.401 0.300 0.14 0.50 1.091 0.547 1.186 0.451 1 1 756 Kepler-228 10872983 6043 200 4.467 0.300 -0.07 0.50 1.014 0.465 1.484 0.447 1 1 757 Kepler-229 10910878 5120 200 4.633 0.300 -0.11 0.50 0.728 0.257 3.026 0.944 1 1 759 Kepler-230 11018648 5588 200 4.551 0.300 -0.29 0.50 0.817 0.415 2.234 0.791 1 1 775 Kepler-52 11754553 4263 100 4.729 0.150 -0.15 0.10 0.556 0.021 4.943 0.377 3 3 780 11918099 4986 200 4.650 0.300 -0.10 0.50 0.694 0.317 3.309 1.074 1 1 784 Kepler-231 12066335 3767 150 4.779 0.200 -0.10 0.15 0.490 0.021 6.303 0.440 1 1 787 Kepler-232 12366084 5847 200 4.495 0.300 0.08 0.50 0.968 0.460 1.657 0.520 1 1 790 Kepler-233 12470844 5360 200 4.614 0.300 -0.07 0.50 0.758 0.206 2.784 0.967 1 1 800 Kepler-234 3342970 6224 200 4.421 0.300 0.07 0.50 1.113 0.495 1.218 0.392 1 1 806 Kepler-30 3832474 5461 109 4.546 0.200 0.19 0.09 0.880 0.140 2.054 0.466 4 3 812 Kepler-235 4139816 4255 100 4.730 0.150 -0.16 0.10 0.554 0.021 4.983 0.375 3 3 817 Kepler-236 4725681 3750 150 4.753 0.200 0.08 0.15 0.510 0.019 5.706 0.357 1 1 825 Kepler-237 5252423 4861 200 4.583 0.300 -0.08 0.50 0.725 0.383 2.712 1.120 1 1 829 Kepler-53 5358241 6085 200 4.498 0.300 -0.20 0.50 0.958 0.466 1.688 0.501 1 1 834 Kepler-238 5436502 5751 100 4.194 0.150 0.30 0.10 1.430 0.264 0.560 0.311 3 3 835 Kepler-239 5456651 4914 100 4.583 0.150 0.12 0.10 0.763 0.044 2.573 0.372 3 3 837 Kepler-240 5531576 4985 200 4.626 0.300 0.09 0.50 0.739 0.299 2.932 1.028 1 1 841 Kepler-27 5792202 5399 84 4.540 0.200 0.41 0.07 0.890 0.037 2.002 0.207 4 1 842 Kepler-241 5794379 4699 200 4.627 0.300 -0.24 0.50 0.668 0.289 3.257 1.171 1 1

– 48 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

853 Kepler-242 6428700 5020 200 4.492 0.300 0.10 0.50 0.850 0.522 1.875 1.080 1 1 857 Kepler-243 6587280 5228 200 4.565 0.300 0.24 0.50 0.842 0.398 2.242 0.819 1 1 864 Kepler-244 6849310 5554 200 4.585 0.300 -0.19 0.50 0.803 0.338 2.457 0.891 1 1 869 6948054 5100 100 4.560 0.150 0.03 0.10 0.795 0.053 2.359 0.379 3 3 870 Kepler-28 6949607 4633 100 4.652 0.150 0.05 0.10 0.666 0.034 3.463 0.396 3 3 872 Kepler-46 7109675 5309 200 4.583 0.300 -0.11 0.50 0.790 0.441 2.492 0.914 1 1 874 Kepler-246 7134976 5206 200 4.557 0.300 0.14 0.50 0.831 0.422 2.225 0.864 1 1 877 Kepler-81 7287995 4500 116 4.696 0.200 -0.18 0.10 0.595 0.029 4.282 0.437 4 1 880 Kepler-82 7366258 5428 100 4.466 0.150 0.15 0.10 0.945 0.140 1.585 0.452 3 3 881 7373451 5067 100 4.585 0.150 -0.07 0.10 0.757 0.046 2.620 0.394 3 3 884 Kepler-247 7434875 5100 200 4.608 0.300 0.17 0.50 0.768 0.214 2.708 0.873 1 1 886 Kepler-54 7455287 4252 100 4.730 0.150 -0.16 0.10 0.554 0.021 4.983 0.379 3 3 892 7678434 5183 200 4.596 0.300 -0.12 0.50 0.756 0.436 2.679 0.998 1 1 896 Kepler-248 7825899 5190 161 4.573 0.200 0.34 0.10 0.831 0.099 2.306 0.459 4 1 898 Kepler-83 7870390 4648 116 4.718 0.200 -0.25 0.12 0.594 0.033 4.514 0.473 4 1 899 Kepler-249 7907423 3568 150 4.777 0.200 0.02 0.15 0.482 0.018 6.381 0.378 1 1 904 Kepler-55 8150320 4503 100 4.684 0.150 -0.04 0.10 0.619 0.028 4.019 0.395 3 3 906 Kepler-250 8226994 5160 200 4.565 0.300 0.06 0.50 0.805 0.462 2.337 0.958 1 1 907 Kepler-251 8247638 5526 100 4.486 0.150 -0.18 0.10 0.890 0.155 1.754 0.544 3 3 912 Kepler-252 8505670 4208 150 4.721 0.200 -0.19 0.15 0.549 0.032 4.909 0.570 1 1 918 8672910 5553 200 4.549 0.300 -0.07 0.50 0.855 0.428 2.125 0.729 1 1 921 Kepler-253 8689373 5208 200 4.595 0.300 0.05 0.50 0.786 0.322 2.571 0.845 1 1 934 Kepler-254 9334289 5957 200 4.524 0.300 -0.19 0.50 0.910 0.433 1.890 0.581 1 1 935 9347899 6034 168 4.219 0.160 -0.28 0.10 1.306 0.302 0.645 0.406 3 3 936 9388479 3581 150 4.768 0.200 0.14 0.15 0.493 0.017 6.106 0.330 1 1 938 Kepler-255 9415172 5573 200 4.516 0.300 0.21 0.50 0.933 0.368 1.809 0.569 1 1 939 Kepler-256 9466668 5551 111 4.223 0.190 0.17 0.10 1.301 0.316 0.659 0.486 3 3 941 Kepler-257 9480189 5180 200 4.360 0.300 0.32 0.50 1.037 0.518 1.136 0.749 1 1 945 9605514 6318 200 4.446 0.300 -0.19 0.50 1.057 0.446 1.355 0.414 1 1 951 Kepler-258 9775938 4942 200 4.441 0.300 0.41 0.50 0.915 0.611 1.550 0.916 1 1 952 Kepler-32 9787239 4223 100 4.733 0.150 -0.15 0.10 0.550 0.021 5.050 0.377 3 3 954 Kepler-259 9823457 5938 200 4.532 0.300 -0.17 0.50 0.898 0.435 1.949 0.598 1 1 961 Kepler-42 8561063 3930 304 4.760 0.150 -0.23 0.10 0.508 0.040 5.797 0.751 3 3 966 3233043 5056 200 3.970 0.300 -0.12 0.50 1.679 0.511 0.286 0.535 1 1

– 49 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

986 Kepler-260 2854698 5250 257 4.494 0.200 0.00 0.21 0.862 0.233 1.854 0.761 4 3 988 Kepler-261 2302548 5098 100 4.561 0.150 0.03 0.10 0.794 0.050 2.366 0.375 3 4 989 10743597 5627 200 4.540 0.300 0.02 0.50 0.886 0.448 2.007 0.643 1 1 993 Kepler-262 1718189 5841 200 4.541 0.300 -0.12 0.50 0.881 0.361 2.026 0.653 1 1 999 Kepler-263 2165002 5265 200 4.576 0.300 -0.11 0.50 0.785 0.427 2.461 0.958 1 1 1001 Kepler-264 1871056 6158 100 4.147 0.150 -0.00 0.10 1.550 0.314 0.467 0.261 3 3 1015 8158127 6477 250 4.382 0.300 -0.10 0.50 1.192 0.516 1.037 0.278 1 1 1050 5809890 5042 100 4.576 0.150 0.01 0.10 0.771 0.047 2.527 0.386 3 4 1052 Kepler-265 5956342 5835 118 4.326 0.150 -0.28 0.10 1.103 0.228 0.968 0.515 3 3 1060 5880320 6025 181 4.087 0.200 -0.33 0.10 1.537 0.411 0.399 0.397 3 3 1069 8222813 5424 250 4.309 0.300 0.24 0.50 1.135 0.534 0.922 0.530 1 1 1070 8240904 5885 250 4.453 0.300 0.11 0.50 1.028 0.498 1.415 0.470 1 1 1078 Kepler-267 10166274 4258 100 4.729 0.150 -0.16 0.10 0.555 0.021 4.963 0.382 3 3 1089 3247268 6179 200 4.432 0.300 -0.13 0.50 1.062 0.565 1.306 0.381 1 1 1102 Kepler-24 3231341 5897 219 4.200 0.150 -0.37 0.10 1.289 0.291 0.628 0.423 3 3 1113 Kepler-268 2854914 6081 100 4.287 0.150 -0.02 0.10 1.274 0.234 0.771 0.354 3 3 1119 3003992 5750 – 4.5 – 0.0 – 1.0 – – – -1 1 1127 6359320 5847 250 4.500 0.300 0.02 0.50 0.959 0.429 1.692 0.546 1 1 1134 8414907 5058 200 4.558 0.300 0.01 0.50 0.784 0.502 2.369 1.103 1 1 1148 Kepler-270 8410727 6067 100 4.196 0.150 0.11 0.10 1.461 0.284 0.551 0.288 3 3 1151 Kepler-271 8280511 5524 100 4.493 0.150 -0.20 0.10 0.880 0.158 1.799 0.550 3 3 1161 Kepler-272 10426656 5297 200 4.426 0.300 -0.16 0.50 0.929 0.497 1.474 0.819 1 1 1163 Kepler-273 10468940 5626 200 4.514 0.300 -0.48 0.50 0.815 0.464 2.059 0.903 1 1 1175 10350571 5654 143 3.903 0.270 0.02 0.10 2.030 0.623 0.198 0.224 3 3 1194 3554031 4527 250 4.676 0.300 -0.18 0.50 0.608 0.084 4.003 1.096 1 1 1196 Kepler-274 3348082 6023 200 4.440 0.300 -0.19 0.50 1.007 0.541 1.405 0.514 1 1 1198 3447722 6165 100 4.229 0.150 -0.07 0.10 1.383 0.258 0.627 0.342 3 3 1203 Kepler-276 3962243 6105 200 4.453 0.300 0.01 0.50 1.046 0.485 1.392 0.413 1 1 1215 Kepler-277 3939150 6040 131 4.176 0.150 0.06 0.10 1.483 0.284 0.517 0.291 3 3 1221 Kepler-278 3640905 4991 75 3.616 0.044 0.28 0.10 2.935 0.066 0.072 0.001 5 3 1231 6462874 4251 200 4.730 0.300 -0.46 0.50 0.537 0.054 5.129 0.897 1 1 1236 Kepler-279 6677841 6363 259 4.051 0.150 -0.20 0.10 1.746 0.315 0.329 0.136 3 3 1239 6607286 6111 250 4.454 0.300 0.03 0.50 1.051 0.430 1.388 0.445 1 1 1240 Kepler-280 6690082 5744 200 4.537 0.300 -0.17 0.50 0.886 0.426 1.996 0.689 1 1

– 50 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

1241 Kepler-56 6448890 4840 97 3.306 0.072 0.20 0.16 4.230 0.150 0.025 0.001 5 3 1258 Kepler-281 8630788 5723 200 4.531 0.300 0.01 0.50 0.899 0.347 1.941 0.651 1 1 1261 8678594 6063 200 4.445 0.300 0.12 0.50 1.068 0.468 1.341 0.399 1 1 1270 Kepler-57 8564587 5328 200 4.604 0.300 -0.04 0.50 0.773 0.251 2.670 0.879 1 1 1276 8804283 5647 200 4.556 0.300 0.00 0.50 0.859 0.310 2.153 0.778 1 1 1278 Kepler-282 8609450 5602 155 4.459 0.150 -0.37 0.10 0.904 0.215 1.624 0.679 3 3 1279 8628758 5773 100 4.362 0.150 -0.03 0.10 1.097 0.208 1.056 0.463 3 4 1298 Kepler-283 10604335 4351 100 4.721 0.150 -0.20 0.10 0.566 0.024 4.770 0.403 3 3 1301 Kepler-284 10538176 5615 200 4.580 0.300 -0.14 0.50 0.814 0.356 2.402 0.844 1 1 1305 Kepler-285 10730034 5411 200 4.584 0.300 -0.06 0.50 0.808 0.348 2.439 0.862 1 1 1306 Kepler-286 10858691 5580 131 4.495 0.150 -0.35 0.10 0.863 0.167 1.851 0.623 3 3 1307 Kepler-287 10973814 5806 200 4.402 0.300 -0.08 0.50 1.032 0.466 1.253 0.511 1 1 1312 10963242 6374 200 4.430 0.300 -0.14 0.50 1.087 0.465 1.272 0.402 1 1 1316 10794087 5845 101 4.088 0.150 0.31 0.10 1.687 0.320 0.367 0.209 3 3 1332 Kepler-288 4455231 5918 250 4.353 0.300 -0.22 0.50 1.091 0.518 1.062 0.450 1 1 1336 Kepler-58 4077526 6099 200 4.372 0.300 -0.12 0.50 1.127 0.526 1.072 0.391 1 1 1338 4466677 5826 200 4.431 0.300 -0.25 0.50 0.975 0.438 1.421 0.553 1 1 1342 4275721 6222 200 4.397 0.300 -0.72 0.50 1.003 0.500 1.278 0.581 1 1 1353 Kepler-289 7303287 5930 107 4.334 0.150 -0.06 0.10 1.162 0.218 0.937 0.423 3 3 1358 7376983 4762 250 4.652 0.300 0.12 0.50 0.692 0.304 3.335 1.075 1 1 1359 6946199 5985 250 4.531 0.300 -0.51 0.50 0.852 0.466 2.046 0.692 1 1 1360 Kepler-290 7102227 5147 200 4.622 0.300 -0.06 0.50 0.743 0.382 2.889 1.022 1 1 1363 Kepler-291 6936909 6002 200 4.472 0.300 0.07 0.50 1.016 0.441 1.501 0.450 1 1 1364 Kepler-292 6962977 5299 100 4.536 0.150 -0.09 0.10 0.826 0.073 2.147 0.412 3 3 1366 Kepler-293 6932987 5804 200 4.504 0.300 0.13 0.50 0.957 0.398 1.716 0.537 1 1 1378 7375795 5691 131 4.407 0.150 -0.29 0.10 0.983 0.222 1.311 0.599 3 3 1396 Kepler-294 9455556 5913 200 4.491 0.300 -0.00 0.50 0.976 0.455 1.631 0.495 1 1 1408 9150827 4261 100 4.730 0.150 -0.18 0.10 0.553 0.021 4.990 0.380 3 3 1413 Kepler-295 9006449 5603 200 4.444 0.300 -0.33 0.50 0.898 0.473 1.590 0.774 1 1 1422 Kepler-296 11497958 4249 100 4.729 0.150 -0.12 0.10 0.557 0.021 4.924 0.369 3 3 1426 11122894 5619 100 4.468 0.150 -0.22 0.10 0.915 0.165 1.633 0.548 3 3 1430 Kepler-298 11176127 4465 100 4.709 0.150 -0.24 0.10 0.582 0.025 4.526 0.414 3 3 1432 Kepler-299 11014932 5617 112 4.394 0.150 -0.02 0.10 1.032 0.208 1.214 0.515 3 3 1435 Kepler-300 11037335 5986 200 4.532 0.300 -0.24 0.50 0.900 0.410 1.939 0.673 1 2

– 51 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

1436 Kepler-301 11389771 5815 200 4.525 0.300 -0.18 0.50 0.900 0.481 1.912 0.581 1 1 1445 11336883 6209 100 4.165 0.150 0.02 0.10 1.533 0.300 0.488 0.260 3 3 1447 7622486 5750 – 4.5 – 0.0 – 1.0 – – – -1 1 1475 4770365 4056 150 4.745 0.200 -0.23 0.15 0.518 0.027 5.499 0.538 1 1 1480 7512982 5092 200 4.657 0.300 -0.22 0.50 0.689 0.266 3.386 1.050 1 1 1486 Kepler-302 7898352 5740 107 4.286 0.150 0.06 0.10 1.220 0.249 0.805 0.433 3 3 1515 Kepler-303 7871954 3944 150 4.768 0.200 -0.36 0.15 0.485 0.025 6.190 0.583 1 1 1529 Kepler-59 9821454 6307 200 4.468 0.300 -0.25 0.50 1.011 0.499 1.490 0.445 1 1 1557 5371776 4731 100 4.635 0.150 0.02 0.10 0.687 0.037 3.234 0.397 3 3 1563 Kepler-305 5219234 5100 100 4.561 0.150 0.03 0.10 0.794 0.050 2.365 0.374 3 3 1567 Kepler-306 5438099 4954 100 4.611 0.150 -0.10 0.10 0.719 0.041 2.923 0.401 3 0 1576 5299459 5517 100 4.430 0.150 0.19 0.10 1.006 0.173 1.359 0.460 3 4 1589 Kepler-84 5301750 6031 143 4.323 0.150 -0.18 0.10 1.169 0.219 0.912 0.413 3 3 1590 5542466 4960 200 4.536 0.300 -0.07 0.50 0.787 0.449 2.237 1.095 1 1 1593 Kepler-308 5289854 5895 200 4.508 0.300 -0.11 0.50 0.941 0.452 1.758 0.548 1 1 1596 Kepler-309 10027323 4713 100 4.612 0.150 0.20 0.10 0.721 0.040 2.927 0.388 3 3 1598 Kepler-310 10004738 5797 200 4.521 0.300 -0.30 0.50 0.876 0.406 1.942 0.650 1 1 1601 5438757 5738 200 4.540 0.300 -0.14 0.50 0.874 0.400 2.042 0.625 1 1 1608 Kepler-311 10055126 5905 131 4.308 0.150 -0.09 0.10 1.188 0.230 0.863 0.422 3 4 1627 6543893 5410 250 4.586 0.300 -0.20 0.50 0.784 0.417 2.524 0.880 1 1 1628 Kepler-312 6975129 6115 100 4.191 0.150 0.05 0.10 1.467 0.283 0.542 0.284 3 3 1639 10749128 6289 200 4.418 0.300 -0.04 0.50 1.119 0.535 1.200 0.324 1 1 1647 11153121 5727 100 4.127 0.150 0.21 0.10 1.536 0.162 0.447 0.272 3 4 1692 Kepler-314 6616218 5378 100 4.465 0.150 0.26 0.10 0.950 0.135 1.564 0.434 3 3 1707 Kepler-315 7703955 5796 108 4.377 0.150 -0.25 0.10 1.037 0.202 1.157 0.526 3 3 1713 Kepler-316 8230616 4204 200 4.743 0.300 -0.48 0.50 0.520 0.052 5.463 0.958 1 1 1731 8266276 4755 250 4.532 0.300 0.30 0.50 0.798 0.517 2.192 1.206 1 1 1737 3745690 5987 200 4.498 0.300 -0.11 0.50 0.963 0.472 1.678 0.454 1 1 1747 7032421 5658 200 4.540 0.300 0.07 0.50 0.887 0.332 2.004 0.615 1 1 1750 6209677 5797 200 4.466 0.300 -0.21 0.50 0.939 0.431 1.598 0.615 1 1 1751 9729691 5207 200 4.391 0.300 0.06 0.50 0.989 0.507 1.277 0.764 1 1 1756 3967760 5497 200 4.479 0.300 0.26 0.50 0.953 0.395 1.623 0.604 1 1 1760 Kepler-317 3967760 5497 200 4.493 0.300 0.26 0.50 0.941 0.429 1.696 0.559 1 1 1779 Kepler-318 9909735 5746 100 4.325 0.150 0.19 0.10 1.189 0.210 0.900 0.404 3 3

– 52 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

1781 11551692 4820 100 4.611 0.150 0.06 0.10 0.721 0.041 2.918 0.392 3 3 1783 10005758 5804 101 4.186 0.150 0.02 0.10 1.393 0.280 0.566 0.354 3 3 1792 8552719 5689 50 4.442 0.100 0.45 0.08 1.039 0.061 1.371 0.194 2 0 1803 4349442 4915 100 4.608 0.150 -0.04 0.10 0.724 0.041 2.888 0.392 3 3 1805 Kepler-319 4644952 5526 100 4.487 0.150 -0.08 0.10 0.903 0.125 1.748 0.471 3 3 1806 Kepler-320 9529744 6435 200 4.419 0.300 -0.24 0.50 1.108 0.519 1.218 0.333 1 1 1809 Kepler-321 8240797 5740 100 4.302 0.150 0.06 0.10 1.194 0.230 0.851 0.437 3 3 1820 Kepler-322 8277797 5388 100 4.501 0.150 0.06 0.10 0.890 0.096 1.833 0.412 3 4 1824 Kepler-323 2989404 5987 150 4.310 0.150 -0.19 0.10 1.178 0.228 0.878 0.424 3 4 1831 11601584 5194 100 4.530 0.150 0.08 0.10 0.840 0.072 2.078 0.389 3 3 1832 Kepler-325 11709244 5752 200 4.411 0.300 -0.17 0.50 1.003 0.497 1.319 0.612 1 1 1835 Kepler-326 9471268 5105 100 4.556 0.150 0.05 0.10 0.801 0.052 2.322 0.366 3 0 1843 5080636 3956 297 4.758 0.150 -0.23 0.10 0.511 0.041 5.753 0.755 3 3 1845 3338885 4936 200 3.977 0.300 0.51 0.50 1.669 0.435 0.292 0.133 1 1 1858 8160953 5731 200 4.441 0.300 0.07 0.50 1.004 0.431 1.409 0.456 1 1 1860 4157325 5674 100 4.397 0.150 0.05 0.10 1.050 0.196 1.200 0.470 3 4 1867 Kepler-327 8167996 3799 100 4.758 0.100 -0.20 0.10 0.492 0.016 5.972 0.367 1 1 1871 9758089 4587 100 4.656 0.150 0.09 0.10 0.661 0.034 3.521 0.406 3 3 1873 Kepler-328 4939346 6210 200 4.438 0.300 0.09 0.50 1.078 0.396 1.308 0.442 1 1 1874 Kepler-329 8978528 4257 200 4.740 0.300 -0.57 0.50 0.523 0.052 5.389 0.934 1 1 1884 4851530 5275 250 4.504 0.300 -0.29 0.50 0.817 0.537 2.011 1.035 1 1 1889 11074178 5742 200 4.551 0.300 -0.16 0.50 0.862 0.394 2.119 0.634 1 1 1891 Kepler-330 8680979 5117 200 4.636 0.300 -0.10 0.50 0.722 0.267 3.076 0.908 1 1 1895 Kepler-331 4263293 4347 200 4.768 0.300 -0.85 0.50 0.492 0.047 6.138 1.041 1 1 1899 7047922 6332 200 4.339 0.300 -0.15 0.50 1.207 0.592 0.929 0.297 1 1 1905 Kepler-332 10328393 4955 100 4.611 0.150 -0.10 0.10 0.720 0.041 2.928 0.399 3 3 1908 Kepler-333 5706966 4259 200 4.732 0.300 -0.47 0.50 0.534 0.054 5.187 1.002 1 1 1909 Kepler-334 10130039 5828 100 4.385 0.150 -0.08 0.10 1.068 0.194 1.148 0.456 3 3 1915 Kepler-335 9101496 5877 112 4.017 0.160 0.23 0.10 1.854 0.350 0.286 0.173 3 3 1916 Kepler-336 6037581 5867 100 4.264 0.150 0.16 0.10 1.304 0.230 0.720 0.351 3 4 1920 8218379 5485 200 4.590 0.300 -0.21 0.50 0.796 0.379 2.505 0.887 1 1 1922 9411166 6069 200 4.487 0.300 -0.10 0.50 0.975 0.414 1.615 0.579 1 1 1929 Kepler-337 10136549 5684 175 4.004 0.250 0.02 0.10 1.761 0.485 0.289 0.362 3 0 1930 5511081 5923 77 4.017 0.073 -0.07 0.10 1.735 0.082 0.309 0.034 5 3

– 53 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

1931 Kepler-339 10978763 5631 200 4.586 0.300 -0.24 0.50 0.802 0.362 2.463 0.915 1 1 1932 Kepler-340 5202905 6620 376 4.063 0.150 -0.02 0.10 1.850 0.416 0.317 0.182 3 3 1940 10005788 4306 200 4.726 0.300 -0.44 0.50 0.541 0.060 5.051 1.044 1 1 1944 2438513 5770 100 4.382 0.150 0.06 0.10 1.088 0.195 1.124 0.434 3 3 1945 11656918 5580 200 4.513 0.300 0.29 0.50 0.940 0.394 1.784 0.578 1 1 1952 Kepler-341 7747425 6012 200 4.437 0.300 -0.14 0.50 1.024 0.519 1.369 0.455 1 1 1955 Kepler-342 9892816 6175 100 4.187 0.150 -0.04 0.10 1.472 0.257 0.534 0.318 3 3 1960 Kepler-343 6949061 5807 100 4.184 0.150 0.13 0.10 1.433 0.261 0.546 0.323 3 3 1961 7269493 5360 100 4.523 0.150 -0.05 0.10 0.851 0.079 2.024 0.410 3 3 1970 Kepler-344 9650808 5774 200 4.451 0.300 -0.10 0.50 0.976 0.454 1.486 0.518 1 1 1977 Kepler-345 9412760 4504 100 4.683 0.150 -0.02 0.10 0.623 0.029 3.974 0.399 3 4 1978 Kepler-346 9518318 6033 200 4.464 0.300 -0.03 0.50 1.021 0.476 1.462 0.399 1 1 1992 11450414 6088 200 4.472 0.300 -0.07 0.50 1.005 0.464 1.513 0.461 1 1 2007 11069176 6085 200 4.408 0.300 -0.07 0.50 1.085 0.542 1.211 0.388 1 1 2011 Kepler-348 5384079 6177 100 4.244 0.150 -0.06 0.10 1.359 0.251 0.657 0.325 3 3 2022 Kepler-349 8564674 5956 200 4.518 0.300 -0.09 0.50 0.927 0.349 1.822 0.582 1 1 2025 Kepler-350 4636578 6186 100 4.150 0.170 -0.09 0.10 1.534 0.306 0.470 0.292 3 4 2028 Kepler-351 7102316 5643 200 4.556 0.300 -0.13 0.50 0.854 0.414 2.164 0.770 1 1 2029 Kepler-352 9489524 5212 100 4.566 0.150 -0.14 0.10 0.781 0.053 2.430 0.404 3 3 2036 Kepler-353 6382217 3903 100 4.751 0.100 -0.20 0.10 0.504 0.016 5.739 0.355 1 1 2037 9634821 5016 250 4.384 0.300 0.47 0.50 0.993 0.629 1.253 0.863 1 1 2038 Kepler-85 8950568 5436 100 4.494 0.150 -0.03 0.10 0.893 0.130 1.788 0.468 3 3 2045 Kepler-354 6026438 4648 200 4.627 0.300 -0.04 0.50 0.674 0.210 3.223 1.065 1 1 2048 8956206 5146 100 4.555 0.150 -0.02 0.10 0.799 0.054 2.315 0.387 3 3 2051 Kepler-355 7265298 6184 250 4.441 0.300 -0.05 0.50 1.066 0.478 1.331 0.399 1 1 2053 Kepler-356 2307415 6133 100 4.256 0.150 -0.02 0.10 1.335 0.243 0.689 0.326 3 3 2073 Kepler-357 8164257 5036 200 4.503 0.300 0.05 0.50 0.834 0.487 1.956 1.082 1 1 2080 Kepler-358 10864531 5908 200 4.504 0.300 -0.03 0.50 0.954 0.476 1.718 0.514 1 1 2086 Kepler-60 6768394 5862 154 4.194 0.170 -0.09 0.10 1.363 0.323 0.586 0.404 3 4 2092 Kepler-359 6696580 6248 250 4.429 0.300 -0.04 0.50 1.086 0.503 1.268 0.449 1 1 2098 6105462 6432 200 4.249 0.300 -0.45 0.50 1.298 0.618 0.702 0.302 1 1 2111 Kepler-360 8612275 6053 200 4.423 0.300 -0.12 0.50 1.058 0.501 1.283 0.397 1 1 2113 7207061 5379 250 4.570 0.300 -0.02 0.50 0.829 0.426 2.297 0.835 1 1 2135 Kepler-361 9904006 6169 100 4.254 0.150 -0.04 0.10 1.343 0.255 0.680 0.322 3 3

– 54 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

2147 Kepler-362 10404582 5788 200 4.639 0.300 -0.72 0.50 0.722 0.304 3.091 0.959 1 1 2148 Kepler-363 6021193 5593 100 4.152 0.150 0.34 0.10 1.485 0.231 0.488 0.246 3 4 2150 3229150 5952 200 4.496 0.300 -0.05 0.50 0.962 0.423 1.672 0.569 1 1 2153 Kepler-364 10253547 6108 125 4.273 0.150 -0.11 0.10 1.284 0.249 0.735 0.363 3 4 2159 8804455 5715 100 4.336 0.150 0.04 0.10 1.136 0.225 0.962 0.465 3 3 2160 5546761 5785 200 4.587 0.300 -0.32 0.50 0.803 0.288 2.470 0.845 1 1 2163 Kepler-365 11358389 6012 200 4.434 0.300 -0.05 0.50 1.048 0.487 1.329 0.419 1 1 2167 6041734 6244 250 4.405 0.300 -0.37 0.50 1.052 0.603 1.242 0.479 1 1 2168 Kepler-366 11308499 6209 200 4.452 0.300 -0.08 0.50 1.048 0.470 1.385 0.389 1 1 2169 9006186 5399 100 4.476 0.150 0.18 0.10 0.933 0.125 1.642 0.428 3 3 2173 Kepler-367 11774991 4710 100 4.631 0.150 0.08 0.10 0.695 0.037 3.158 0.393 3 3 2174 8261920 4365 200 4.690 0.300 -0.15 0.50 0.592 0.066 4.248 0.982 1 1 2175 Kepler-368 9022166 5502 206 3.903 0.350 0.08 0.10 2.019 0.559 0.199 0.364 3 3 2179 Kepler-369 10670119 3591 100 4.785 0.100 -0.10 0.10 0.471 0.014 6.645 0.318 1 1 2183 Kepler-370 5706595 5852 200 4.531 0.300 -0.12 0.50 0.900 0.416 1.938 0.607 1 1 2188 10518424 6107 200 4.491 0.300 -0.33 0.50 0.946 0.569 1.679 0.524 1 1 2194 Kepler-371 3548044 5666 146 4.390 0.150 -0.36 0.10 0.992 0.249 1.254 0.649 3 3 2195 Kepler-372 11401767 6509 200 4.405 0.300 -0.14 0.50 1.137 0.488 1.150 0.373 1 1 2218 Kepler-373 12058204 5787 200 4.562 0.300 -0.27 0.50 0.845 0.418 2.216 0.718 1 1 2220 Kepler-374 6871071 5977 200 4.479 0.300 -0.44 0.50 0.911 0.474 1.699 0.637 1 1 2224 8892157 5826 200 4.534 0.300 -0.12 0.50 0.896 0.413 1.959 0.565 1 1 2236 Kepler-375 10723367 5826 200 4.567 0.300 -0.20 0.50 0.837 0.291 2.265 0.807 1 1 2248 11030475 5164 100 4.556 0.150 -0.04 0.10 0.798 0.062 2.324 0.394 3 3 2261 3734418 5141 100 4.566 0.150 -0.06 0.10 0.783 0.054 2.426 0.398 3 4 2278 Kepler-376 3342794 5900 100 4.303 0.150 -0.16 0.10 1.175 0.234 0.862 0.447 3 4 2279 Kepler-377 3661886 5949 128 4.303 0.150 -0.01 0.10 1.224 0.229 0.832 0.391 3 4 2287 Kepler-378 9718066 4661 100 4.647 0.150 0.03 0.10 0.671 0.035 3.402 0.397 3 3 2289 Kepler-379 3867615 6054 100 4.273 0.150 0.05 0.10 1.306 0.237 0.729 0.335 3 0 2298 9334893 4734 200 4.771 0.300 -1.42 0.50 0.499 0.039 6.068 1.001 1 1 2311 4247991 5579 100 4.442 0.150 0.10 0.10 0.987 0.158 1.428 0.452 3 0 2333 Kepler-380 11121752 6045 147 4.293 0.150 -0.16 0.10 1.224 0.242 0.811 0.406 3 4 2339 7033233 4666 100 4.643 0.150 0.06 0.10 0.677 0.035 3.345 0.390 3 3 2352 8013439 6152 100 4.120 0.180 -0.18 0.10 1.568 0.350 0.431 0.321 3 3 2357 7449554 5995 200 4.526 0.300 -0.26 0.50 0.902 0.416 1.912 0.580 1 1

– 55 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

2362 8495415 5083 250 4.541 0.300 0.00 0.50 0.799 0.451 2.238 1.044 1 1 2369 5602588 6072 200 4.480 0.300 -0.11 0.50 0.996 0.487 1.559 0.482 1 1 2374 Kepler-382 9364290 5600 200 4.401 0.300 -0.31 0.50 0.945 0.452 1.366 0.696 1 1 2413 Kepler-383 3234598 4710 200 4.624 0.300 -0.16 0.50 0.672 0.265 3.214 1.173 1 1 2414 Kepler-384 8611832 5577 145 4.475 0.150 -0.39 0.10 0.882 0.251 1.720 0.714 3 4 2422 11360805 5497 200 4.413 0.300 0.13 0.50 1.007 0.408 1.320 0.599 1 1 2433 Kepler-385 11968463 6326 250 4.412 0.300 -0.03 0.50 1.126 0.564 1.178 0.359 1 1 2442 Kepler-386 11080405 5178 200 4.558 0.300 -0.23 0.50 0.767 0.429 2.424 1.046 1 1 2443 Kepler-387 9209624 5774 154 4.353 0.150 -0.37 0.10 1.046 0.240 1.097 0.593 3 4 2466 Kepler-388 8544992 4498 200 4.690 0.300 -0.33 0.50 0.586 0.069 4.305 0.923 1 1 2473 Kepler-389 8753896 5376 250 4.570 0.300 -0.19 0.50 0.792 0.402 2.405 0.948 1 1 2498 Kepler-390 5959719 5166 100 4.569 0.150 -0.12 0.10 0.776 0.053 2.474 0.405 3 3 2521 7183745 5284 250 4.618 0.300 -0.12 0.50 0.751 0.338 2.842 1.014 1 1 2529 8463346 4298 200 4.783 0.300 -0.95 0.50 0.477 0.044 6.536 1.098 1 1 2533 11074835 4929 100 3.354 0.210 -0.08 0.10 3.966 0.895 0.029 0.024 3 3 2534 1996180 6120 100 4.262 0.150 -0.05 0.10 1.318 0.260 0.707 0.355 3 4 2541 Kepler-391 12306058 4940 100 3.455 0.240 -0.00 0.10 3.569 0.853 0.042 0.030 3 0 2554 10471621 4402 200 4.781 0.300 -1.11 0.50 0.480 0.040 6.459 1.055 1 1 2585 Kepler-392 7673841 5938 226 4.323 0.150 -0.29 0.10 1.129 0.231 0.952 0.476 3 3 2586 9827149 5843 250 4.469 0.300 0.26 0.50 1.026 0.425 1.470 0.454 1 1 2595 Kepler-393 8883329 6189 100 4.233 0.150 -0.04 0.10 1.382 0.263 0.631 0.309 3 3 2597 12120307 6402 200 4.408 0.300 -0.13 0.50 1.132 0.580 1.161 0.396 1 1 2612 9602613 5467 200 4.433 0.300 -0.12 0.50 0.939 0.472 1.482 0.725 1 1 2639 11391755 6129 200 4.354 0.300 -0.06 0.50 1.172 0.523 0.991 0.327 1 1 2650 Kepler-395 8890150 4262 100 4.729 0.150 -0.16 0.10 0.556 0.022 4.948 0.385 3 3 2671 2437505 5750 – 4.5 – 0.0 – 1.0 – – – -1 1 2672 Kepler-396 11253827 5579 100 4.444 0.150 0.10 0.10 0.986 0.157 1.441 0.448 3 3 2674 8022489 5700 182 3.985 0.240 0.03 0.10 1.826 0.600 0.266 0.309 3 4 2681 Kepler-397 6878240 5307 100 4.572 0.150 -0.29 0.10 0.767 0.066 2.514 0.468 3 3 2693 Kepler-398 5185897 4493 100 4.689 0.150 -0.07 0.10 0.613 0.028 4.093 0.397 3 4 2696 11071200 7036 200 4.165 0.300 -0.14 0.50 1.657 0.704 0.453 0.153 1 1 2707 Kepler-399 5480640 5502 200 4.620 0.300 -0.83 0.50 0.680 0.363 3.145 1.225 1 1 2711 Kepler-400 5272233 5886 100 4.350 0.150 0.01 0.10 1.145 0.208 0.984 0.416 3 3 2714 Kepler-401 12206313 6117 100 4.254 0.150 -0.04 0.10 1.333 0.244 0.684 0.332 3 3

– 56 –

Table 2—Continued

KOI Kepler-ID KID T_{eff} T_{eff σ} log g log g_σ [Fe/H] [Fe/H]_σ R_⋆ R_{⋆σ} ρ_⋆ ρ_{⋆σ} Flag blend K K cgs cgs R_⊙ R_⊙ g cm^{−3} g cm^{−3}

2722 Kepler-402 7673192 6090 120 4.278 0.150 -0.14 0.10 1.264 0.244 0.763 0.379 3 4 2732 Kepler-403 9886361 6090 100 4.266 0.150 0.07 0.10 1.329 0.236 0.705 0.316 3 4 2768 Kepler-404 9008737 5654 200 4.543 0.300 -0.01 0.50 0.884 0.331 2.027 0.697 1 1 2942 4385148 5743 250 4.562 0.300 -0.19 0.50 0.845 0.349 2.215 0.789 1 1 3057 Kepler-405 3234843 5818 250 4.536 0.300 -0.13 0.50 0.893 0.425 1.973 0.639 1 1

Note. — Flag: -1 - solar parameters assumed ; 0 - original KIC ; 1 - Revised KIC ; 2 - SPC ; 3 - Specmatch ; 4 - SME ; 5 - Asteroseismology blend flag: 0 - nearby star detected that may produce blend, 1 - no measurement, 2 - has speckle, 3 - has spectral matching, 4 - has both

– 57 –

Table 3. Transit Model Parameters

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

41.01 Kepler-100 c 12.815842 2.25 189.1 0.38 0.01384 0.3520 221.8 6.344 55.94755 123.4 5 1 0.000029 0.11 18.6 +0.01-0.38 0.00059 0.0678 2.5 0.042 0.00135 41.02 Kepler-100 b 6.887067 1.47 429.3 0.87 0.00901 0.1008 72.6 4.352 66.17732 48.2 5 1 0.000036 0.12 42.3 +0.00-0.60 0.00073 0.2565 2.3 0.080 0.00305 41.03 Kepler-100 d 35.333072 1.55 49.0 0.59 0.00952 0.8392 100.8 5.826 86.98063 33.8 5 1 0.000319 0.06 4.8 +0.34-0.36 0.00027 0.6508 4.1 0.151 0.00562 46.01 Kepler-101 b 3.487691 5.87 1037.8 0.02 0.03226 0.5797 1263.5 3.834 103.93126 360.2 7 1 0.000002 1.46 625.0 +0.23-0.02 0.00018 0.0492 5.1 0.013 0.00031 46.02 Kepler-101 c 6.029809 1.33 517.1 0.66 0.00734 0.3429 57.8 4.030 65.48205 11.3 6 1 0.000115 0.34 311.4 +0.05-0.49 0.00047 0.3619 6.7 0.339 0.01146 70.01 Kepler-20 c 10.854087 3.14 90.2 0.28 0.02919 1.6704 1024.7 3.758 71.60760 262.3 7 1 0.000006 0.31 22.4 +0.02-0.25 0.00053 0.1499 3.9 0.012 0.00033 70.02 Kepler-20 b 3.696117 1.92 377.1 0.19 0.01783 2.0809 385.5 2.469 67.50058 156.2 7 1 0.000003 0.19 93.5 +0.19-0.19 0.00027 0.2571 3.0 0.015 0.00049 70.03 Kepler-20 d 77.611680 2.73 6.5 0.09 0.02540 1.8567 790.7 7.217 97.72516 130.0 2 1 0.000174 0.27 1.6 +0.28-0.09 0.00033 0.2149 7.8 0.044 0.00135 70.04 Kepler-20 e 6.098530 0.88 192.4 0.49 0.00819 1.6113 76.9 2.792 68.93139 29.7 2 1 0.000033 0.09 47.7 +0.01-0.46 0.00027 0.5057 3.4 0.087 0.00320 70.05 Kepler-20 f 19.577632 0.93 40.7 0.19 0.00862 3.0720 90.2 3.742 68.20249 24.5 7 1 0.000212 0.10 10.1 +0.27-0.19 0.00035 0.9163 5.2 0.163 0.00652 72.01 Kepler-10 b 0.837497 1.45 3462.1 0.15 0.01258 1.2769 188.7 1.797 64.57405 193.4 2 1 0.0000001 0.03 246.1 +0.20-0.11 0.00011 0.1121 1.3 0.009 0.00026 72.02 Kepler-10 c 45.294334 2.28 17.4 0.12 0.01979 1.2239 472.1 6.870 71.67697 162.1 2 1 0.000080 0.05 1.2 +0.21-0.12 0.00020 0.1547 3.9 0.037 0.00098 82.01 Kepler-102 e 16.145671 2.22 19.4 0.50 0.02843 2.0513 949.9 3.635 67.75401 294.0 5 1 0.000010 0.12 2.9 +0.01-0.46 0.00087 0.5451 3.7 0.024 0.00035 82.02 Kepler-102 d 10.311742 1.29 35.2 0.76 0.01649 0.7976 268.1 3.205 67.07925 110.6 5 1 0.000015 0.09 5.3 +0.01-0.55 0.00096 0.7761 3.3 0.025 0.00091 82.03 Kepler-102 f 27.453659 0.83 9.5 0.29 0.01061 4.3098 140.5 3.651 78.02619 35.3 5 1 0.000151 0.05 1.5 +0.15-0.29 0.00033 0.9839 4.9 0.096 0.00319 82.04 Kepler-102 c 7.071440 0.56 59.3 0.11 0.00721 2.6442 66.3 2.832 72.98384 30.9 5 1 0.000042 0.03 8.9 +0.35-0.11 0.00028 0.5952 2.9 0.107 0.00345 82.05 Kepler-102 b 5.286989 0.45 84.9 0.24 0.00573 2.6550 41.2 2.501 68.84930 20.6 5 1 0.000036 0.03 12.8 +0.24-0.24 0.00028 0.8471 2.7 0.126 0.00381

– 58 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

85.01 Kepler-65 c 5.859932 2.57 552.1 0.10 0.01655 0.7965 323.2 4.011 65.03928 238.9 2 1 0.000004 0.05 36.5 +0.20-0.10 0.00011 0.0655 1.6 0.015 0.00043 85.02 Kepler-65 b 2.154915 1.53 2145.6 0.73 0.00984 0.2058 99.3 3.173 66.49786 116.7 2 1 0.000003 0.06 141.9 +0.03-0.52 0.00032 0.1648 1.1 0.025 0.00079 85.03 Kepler-65 d 8.131218 1.50 355.4 0.02 0.00962 0.9507 109.3 4.205 70.99072 82.6 2 1 0.000021 0.03 23.5 +0.38-0.02 0.00014 0.1346 1.8 0.044 0.00157 89.01 84.687433^{tt} 3.32 32.8 0.05 0.01714 0.7027 345.9 10.213 83.56952 93.8 2 1 0.000305 0.67 20.5 +0.33-0.05 0.00024 0.0969 4.9 0.072 0.00217 89.02 207.585413^{tt} 3.86 10.0 0.13 0.01993 6.3154 466.7 6.598 222.88387 68.1 2 1 0.000967 0.78 6.2 +0.28-0.13 0.00034 1.1021 9.4 0.097 0.00221 94.01 Kepler-89 d 22.342995^{tt} 11.03 102.4 0.06 0.06802 0.7729 5504.7 6.662 65.74009 562.4 7 2 0.000006 1.03 24.8 +0.06-0.06 0.00009 0.0103 6.3 0.007 0.00016 94.02 Kepler-89 c 10.423686^{tt} 4.18 283.3 0.35 0.02579 0.5543 772.7 5.223 71.00757 93.4 7 1 0.000013 0.39 68.4 +0.10-0.29 0.00027 0.0986 5.1 0.028 0.00072 94.03 Kepler-89 e 54.320113^{tt} 6.49 31.3 0.04 0.03998 0.8432 1903.8 8.482 94.23978 225.8 7 1 0.000066 0.61 7.5 +0.23-0.04 0.00023 0.0743 8.7 0.028 0.00069 94.04 Kepler-89 b 3.743213^{tt} 1.87 1111.2 0.80 0.01151 0.1512 129.0 3.711 64.62167 37.4 7 1 0.000019 0.20 268.3 +0.11-0.57 0.00064 0.2500 3.8 0.065 0.00261 102.01 1.735138 3.73 1620.6 0.52 0.02848 0.8948 907.4 2.280 68.05958 525.3 7 1 0.0000002 0.68 710.5 +0.08-0.26 0.00046 0.2484 3.0 0.018 0.00016 102.02 4.068458 1.10 524.0 0.52 0.00841 1.0491 78.9 2.775 65.27843 32.5 2 1 0.000023 0.20 229.7 +0.10-0.42 0.00026 0.4047 3.4 0.087 0.00357 108.01 Kepler-103 b 15.965356^{tt} 3.15 131.5 0.11 0.02009 1.5216 476.7 4.520 75.17639 123.3 7 1 0.000022 0.09 15.1 +0.18-0.11 0.00016 0.1182 4.5 0.029 0.00080 108.02 Kepler-103 c 179.612812^{tt} 5.37 5.2 0.68 0.03424 0.2841 1239.1 13.568 228.32568 179.0 7 1 0.000563 0.20 0.6 +0.04-0.46 0.00085 0.1803 8.9 0.148 0.00155 111.01 Kepler-104 b 11.427548 3.10 196.1 0.45 0.02103 0.7805 504.7 4.565 70.61305 127.1 7 1 0.000015 0.53 75.3 +0.02-0.41 0.00087 0.1571 4.2 0.030 0.00077 111.02 Kepler-104 c 23.668205 3.13 74.0 0.77 0.02128 0.3026 458.5 5.872 65.71597 90.9 7 1 0.000056 0.55 28.5 +0.04-0.53 0.00128 0.3681 5.2 0.065 0.00134 111.03 Kepler-104 d 51.755394 3.58 26.2 0.76 0.02429 0.3425 599.5 7.465 204.08611 96.5 7 1 0.000160 0.61 10.1 +0.01-0.52 0.00098 0.3478 7.1 0.097 0.00164 111.04 103.624982 2.07 10.4 0.01 0.01405 0.9448 235.4 9.758 363.10233 3.0 -1 1 0.003918 0.36 4.0 +0.45-0.01 0.00065 0.2528 18.1 0.738 0.01889

– 59 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

112.01 51.079254 2.95 16.8 0.16 0.02485 1.7279 735.1 6.370 118.17996 132.3 3 1 0.000107 0.56 7.5 +0.18-0.16 0.00024 0.2163 7.0 0.040 0.00110 112.02 3.709196 1.26 554.5 0.11 0.01062 1.8283 133.7 2.593 66.98321 56.0 3 1 0.000010 0.24 248.9 +0.33-0.11 0.00024 0.3468 3.4 0.047 0.00169 115.01 Kepler-105 b 5.412200 2.85 398.0 0.20 0.02247 2.0736 589.0 2.811 66.14249 206.5 7 1 0.000004 0.60 196.7 +0.14-0.20 0.00020 0.2610 3.9 0.016 0.00042 115.02 Kepler-105 c 7.125939 1.61 276.4 0.23 0.01272 2.6317 188.4 2.802 72.00421 61.9 7 1 0.000017 0.34 136.7 +0.17-0.23 0.00024 0.4493 4.2 0.044 0.00141 115.03 3.435859 0.51 740.0 0.45 0.00403 0.7184 18.8 3.095 65.66181 9.0 2 1 0.000107 0.12 365.8 +0.01-0.45 0.00038 0.7373 3.3 0.479 0.01487 116.01 13.570791 2.39 91.5 0.47 0.02120 2.5509 509.3 3.218 69.27824 91.8 2 1 0.000028 0.71 60.7 +0.02-0.45 0.00161 0.7144 7.3 0.049 0.00121 116.02 Kepler-106 e 43.844464 2.62 19.1 0.50 0.02325 1.0427 609.0 6.312 84.93401 87.6 7 1 0.000140 0.77 12.7 +0.01-0.44 0.00140 0.2925 8.9 0.073 0.00199 116.03 Kepler-106 c 6.164903 0.83 258.9 0.43 0.00738 1.3307 63.1 3.096 68.63578 15.8 7 1 0.000090 0.24 171.6 +0.05-0.40 0.00039 0.6102 5.7 0.283 0.00846 116.04 Kepler-106 d 23.980154 0.95 42.4 0.31 0.00842 1.8129 82.1 4.614 80.53119 10.3 4 1 0.000387 0.28 28.1 +0.13-0.31 0.00048 0.5554 7.8 0.250 0.00800 117.01 Kepler-107 e 14.749049 3.45 138.0 0.90 0.02237 0.0520 427.4 6.588 71.77998 118.6 7 1 0.000034 0.25 16.3 +0.01-0.54 0.00143 0.1851 4.4 0.131 0.00134 117.02 Kepler-107 c 4.901425 1.81 599.9 0.78 0.01175 0.1569 137.3 4.199 71.60742 57.6 7 1 0.000016 0.18 70.8 +0.01-0.56 0.00108 0.1788 3.1 0.066 0.00174 117.03 Kepler-107 b 3.179997 1.56 1078.6 0.34 0.01011 0.5489 119.7 3.492 66.49904 60.4 7 1 0.000011 0.06 127.3 +0.14-0.34 0.00024 0.1351 2.8 0.057 0.00200 117.04 Kepler-107 d 7.958203 1.07 310.6 0.27 0.00696 0.7873 57.2 4.276 70.79968 18.8 7 1 0.000104 0.06 36.6 +0.20-0.27 0.00031 0.2340 3.8 0.190 0.00612 119.01 Kepler-108 b 49.183921 8.65 59.2 0.03 0.03614 0.3215 1582.1 11.277 74.91123 314.2 7 2 0.000054 0.48 10.3 +0.26-0.03 0.00023 0.0218 6.9 0.046 0.00066 119.02 Kepler-108 c 190.323494 8.18 9.7 0.81 0.03419 0.1074 1118.0 15.700 245.67323 159.2 7 2 0.000988 0.51 1.7 +0.03-0.09 0.00096 0.0488 10.1 0.289 0.00255 123.01 Kepler-109 b 6.481623 2.29 412.9 0.21 0.01586 1.1568 295.5 3.599 55.97759 126.9 7 1 0.000008 0.07 44.0 +0.22-0.21 0.00022 0.1951 3.0 0.027 0.00079 123.02 Kepler-109 c 21.222684 2.52 85.1 0.00 0.01748 0.6871 361.0 6.500 70.57216 126.9 7 1 0.000047 0.08 9.1 +0.35-0.00 0.00018 0.0713 3.8 0.036 0.00127

– 60 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

124.01 Kepler-110 b 12.691112 1.83 130.2 0.13 0.01462 2.0587 252.9 3.755 70.12296 65.4 7 1 0.000036 0.36 65.8 +0.27-0.13 0.00024 0.3095 5.1 0.049 0.00166 124.02 Kepler-110 c 31.719775 2.21 38.0 0.01 0.01758 2.5129 366.4 4.823 75.82056 70.4 7 1 0.000104 0.44 19.2 +0.39-0.01 0.00028 0.3991 7.0 0.053 0.00177 137.01 Kepler-18 c 7.641587^{tt} 4.73 139.6 0.04 0.04294 1.8667 2259.2 3.396 68.40598 233.6 7 1 0.000003 0.51 37.8 +0.20-0.04 0.00021 0.1259 6.6 0.009 0.00022 137.02 Kepler-18 d 14.858911^{tt} 5.67 56.8 0.18 0.05156 3.3764 3232.5 3.456 61.15315 448.0 7 1 0.000006 0.61 15.4 +0.07-0.18 0.00025 0.1874 9.4 0.014 0.00022 137.03 Kepler-18 b 3.504743^{tt} 1.76 395.0 0.05 0.01596 3.7250 310.1 2.026 66.50656 63.6 7 1 0.000005 0.19 106.7 +0.35-0.05 0.00033 0.6190 5.8 0.027 0.00087 139.01 Kepler-111 c 224.784608^{tt} 7.30 2.6 0.72 0.05779 0.6401 3465.0 11.194 75.09604 266.8 7 1 0.000411 0.91 0.8 +0.02-0.04 0.00056 0.0836 16.8 0.100 0.00095 139.02 Kepler-111 b 3.341815^{tt} 1.58 710.6 0.01 0.01247 1.3852 180.7 2.769 74.35574 49.5 7 1 0.000006 0.20 211.7 +0.33-0.01 0.00021 0.1633 4.3 0.032 0.00106 148.01 Kepler-48 b 4.777996 2.07 209.9 0.47 0.01987 1.4327 462.1 2.753 57.06061 102.8 7 1 0.000007 0.14 38.5 +0.02-0.43 0.00047 0.7051 6.3 0.031 0.00093 148.02 Kepler-48 c 9.673950 2.87 81.6 0.21 0.02758 2.3321 936.2 3.291 58.33959 187.2 7 1 0.000012 0.19 14.9 +0.21-0.21 0.00047 0.3623 8.2 0.029 0.00073 148.03 Kepler-48 d 42.896202 2.20 11.3 0.10 0.02113 2.0794 555.0 5.675 79.06467 71.5 7 1 0.000205 0.15 2.1 +0.33-0.10 0.00049 0.3740 12.2 0.086 0.00293 150.01 Kepler-112 b 8.408878 2.36 103.5 0.04 0.02566 1.8064 792.0 3.485 67.00620 145.2 7 1 0.000010 0.57 61.9 +0.30-0.04 0.00027 0.1714 7.2 0.021 0.00069 150.02 Kepler-112 c 28.574263 2.40 20.2 0.08 0.02609 2.1092 821.4 4.963 76.83080 105.4 7 1 0.000060 0.58 12.1 +0.29-0.08 0.00035 0.2614 10.5 0.040 0.00122 152.01 Kepler-79 d 52.090590^{tt} 7.59 30.7 0.00 0.04956 0.7899 2883.7 8.632 91.74508 237.7 7 2 0.000073 1.36 13.1 +0.17-0.00 0.00019 0.0294 15.6 0.026 0.00077 152.02 Kepler-79 c 27.401994^{tt} 3.89 72.4 0.00 0.02537 0.8029 757.2 6.771 66.63239 85.8 7 1 0.000078 0.70 30.9 +0.35-0.00 0.00032 0.0895 11.5 0.054 0.00161 152.03 Kepler-79 b 13.484686^{tt} 3.64 185.6 0.10 0.02374 0.9461 660.0 5.031 69.61335 86.8 7 1 0.000036 0.66 79.2 +0.22-0.10 0.00027 0.1113 10.1 0.041 0.00158 152.04 Kepler-79 e 81.065298^{tt} 3.36 17.0 0.94 0.02192 0.8953 377.6 3.686 72.52908 20.2 7 1 0.001365 0.69 7.2 +0.01-0.65 0.00224 8.4488 31.0 0.213 0.00969 153.01 Kepler-113 c 8.925070 2.24 39.0 0.49 0.02880 3.1948 974.8 2.599 72.71353 126.8 7 1 0.000010 0.19 5.6 +0.10-0.37 0.00213 0.7632 9.9 0.026 0.00063

– 61 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

153.02 Kepler-113 b 4.754000 1.88 90.2 0.15 0.02419 2.7357 745.6 2.483 61.54662 154.8 7 1 0.000005 0.08 12.8 +0.27-0.15 0.00048 0.4495 7.5 0.021 0.00063 156.01 Kepler-114 c 8.041348 1.50 35.5 0.12 0.02061 3.7206 549.3 2.668 76.03761 80.2 7 1 0.000013 0.09 6.8 +0.32-0.12 0.00052 0.7462 7.7 0.031 0.00098 156.02 Kepler-114 b 5.188549 1.26 63.7 0.69 0.01732 1.2554 315.7 2.435 78.36320 54.7 7 1 0.000012 0.13 12.2 +0.14-0.48 0.00147 0.8430 7.0 0.045 0.00140 156.03 Kepler-114 d 11.776134 2.42 21.6 0.47 0.03330 3.1662 1329.7 2.908 75.70477 198.0 7 1 0.000010 0.14 4.2 +0.08-0.35 0.00084 0.6725 9.4 0.022 0.00052 157.01 Kepler-11 c 13.024903^{tt} 3.42 109.7 0.74 0.02704 0.3954 749.2 4.671 71.18223 90.0 7 1 0.000025 1.01 74.5 +0.00-0.53 0.00093 0.3450 8.0 0.042 0.00114 157.02 Kepler-11 d 22.687056^{tt} 3.76 51.6 0.77 0.02971 0.3211 883.0 5.775 81.45380 107.7 7 1 0.000063 1.13 35.0 +0.03-0.53 0.00177 0.3613 11.2 0.070 0.00127 157.03 Kepler-11 e 31.995451^{tt} 4.21 32.7 0.10 0.03325 4.1356 1317.4 4.142 87.15902 117.9 7 1 0.000048 1.24 22.2 +0.28-0.10 0.00041 0.5228 14.2 0.039 0.00087 157.04 Kepler-11 f 46.686403^{tt} 2.76 19.8 0.47 0.02179 1.0947 541.7 6.444 158.03821 54.5 7 1 0.000222 0.81 13.4 +0.09-0.38 0.00046 0.3289 11.7 0.087 0.00252 157.05 Kepler-11 g 118.378018^{tt} 3.77 5.7 0.51 0.02981 0.8328 1005.6 9.516 220.29355 69.8 7 1 0.000591 1.13 3.9 +0.00-0.46 0.00189 0.2357 16.8 0.110 0.00256 157.06 Kepler-11 b 10.303989^{tt} 2.01 148.4 0.36 0.01590 1.0785 296.2 4.109 71.50279 56.6 7 1 0.000040 0.59 100.7 +0.08-0.36 0.00036 0.2383 7.8 0.064 0.00224 159.01 Kepler-115 c 8.990889 2.60 219.4 0.11 0.01980 1.1633 466.7 4.083 69.73792 103.1 7 1 0.000021 0.50 104.1 +0.31-0.11 0.00032 0.1893 6.4 0.040 0.00132 159.02 Kepler-115 b 2.403679 1.09 1281.4 0.43 0.00830 6.9644 77.8 1.306 67.72847 20.2 7 1 0.000012 0.21 608.0 +0.10-0.38 0.00041 3.1508 6.5 0.105 0.00305 168.01 Kepler-23 c 10.742371 3.78 257.6 0.93 0.02235 0.0224 399.9 6.855 66.28603 97.3 7 1 0.000037 0.33 33.7 +0.02-0.33 0.00185 0.0960 5.7 0.308 0.00210 168.02 Kepler-23 d 15.274299 2.20 160.9 0.25 0.01299 0.5382 197.8 6.094 80.58253 41.0 7 1 0.000104 0.09 21.0 +0.16-0.25 0.00032 0.1026 6.2 0.104 0.00387 168.03 Kepler-23 b 7.107163 1.69 451.8 0.66 0.00998 0.2505 105.8 4.776 71.31284 27.8 7 1 0.000075 0.16 59.1 +0.00-0.50 0.00091 0.2607 5.5 0.219 0.00661 171.01 Kepler-116 b 5.968734 3.42 565.6 0.56 0.02155 0.6586 511.7 3.639 70.15762 122.2 7 1 0.000009 0.65 250.8 +0.00-0.48 0.00039 0.2386 6.0 0.036 0.00092 171.02 Kepler-116 c 13.071630 2.30 200.1 0.19 0.01446 3.9354 244.4 3.024 77.43294 37.1 7 1 0.000056 0.44 88.8 +0.24-0.19 0.00038 0.8404 9.2 0.079 0.00263

– 62 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

191.01 15.358770 11.21 45.9 0.54 0.11379 1.6790 14533.4 4.143 65.38425 829.1 2 0 0.000004 1.60 16.6 +0.02-0.02 0.00040 0.0723 24.2 0.017 0.00013 191.02 2.418402 2.28 544.0 0.00 0.02313 2.7748 642.9 1.993 65.50696 69.7 7 1 0.000004 0.33 196.9 +0.44-0.00 0.00051 0.5054 13.1 0.036 0.00104 191.03 0.708613 1.23 2794.8 0.16 0.01250 1.9428 185.3 1.473 66.36683 31.8 7 1 0.000002 0.18 1011.5 +0.29-0.16 0.00045 0.4717 8.8 0.061 0.00185 191.04 38.651883 2.70 13.4 0.90 0.02742 0.1660 624.5 6.117 97.04977 27.1 2 1 0.000362 0.48 4.8 +0.03-0.64 0.00289 0.7943 28.3 0.163 0.00588 199.01 3.268695 12.50 1083.8 0.24 0.09278 0.8221 10008.0 3.454 70.48087 1299.3 7 0 0.0000003 5.02 1031.9 +0.02-0.11 0.00042 0.0325 9.8 0.008 0.00007 199.02 8.785057 2.11 289.1 0.93 0.01567 0.0152 190.3 7.044 68.37137 21.7 0 1 0.000122 0.87 275.2 +0.01-0.65 0.00137 0.1192 10.3 0.258 0.00742 209.01 Kepler-117 c 50.790412 11.30 34.1 0.29 0.07037 0.3632 5741.9 10.898 68.63097 409.5 7 2 0.000039 2.14 15.1 +0.06-0.12 0.00032 0.0275 14.9 0.038 0.00046 209.02 Kepler-117 b 18.795952 7.81 128.0 0.73 0.04862 0.1569 2423.2 7.522 78.82028 324.6 7 2 0.000027 1.48 57.0 +0.02-0.06 0.00062 0.0308 12.5 0.082 0.00089 216.01 Kepler-118 c 20.172020 7.68 41.7 0.02 0.06432 6.8287 5141.3 3.108 74.20840 308.0 7 2 0.000013 3.43 45.2 +0.28-0.02 0.00053 0.5752 28.0 0.021 0.00041 216.02 Kepler-118 b 7.518496 1.96 155.5 0.72 0.01640 1.0075 273.9 2.857 65.53666 24.1 7 1 0.000056 0.94 168.6 +0.22-0.49 0.00293 1.3610 17.0 0.123 0.00459 220.01 Kepler-119 b 2.422082 3.60 504.0 0.30 0.03934 1.1987 1854.4 2.574 65.93928 465.5 7 1 0.000001 1.37 468.7 +0.01-0.30 0.00026 0.1069 5.9 0.013 0.00019 220.02 Kepler-119 c 4.125103 0.92 257.1 0.51 0.01004 1.0158 115.3 2.840 66.64137 24.0 7 1 0.000028 0.35 239.2 +0.45-0.31 0.00040 0.3597 6.8 0.119 0.00452 222.01 Kepler-120 b 6.312501 2.15 23.7 0.79 0.03691 0.6598 1289.8 2.908 65.65419 123.5 7 1 0.000008 0.17 6.0 +0.02-0.55 0.00220 0.7916 15.0 0.034 0.00084 222.02 Kepler-120 c 12.794585 1.53 9.3 0.41 0.02622 2.1821 841.1 3.450 63.76464 64.2 7 1 0.000044 0.09 2.4 +0.06-0.38 0.00069 0.4950 19.1 0.061 0.00209 223.01 Kepler-121 b 3.177422 2.34 230.0 0.11 0.03052 9.0017 1142.7 1.475 67.47787 124.2 7 1 0.000003 1.27 296.4 +0.31-0.11 0.00057 1.4274 14.3 0.022 0.00047 223.02 Kepler-121 c 41.008011 2.27 7.5 0.49 0.02965 4.0489 1019.3 3.978 80.03476 45.6 7 1 0.000191 1.25 9.7 +0.03-0.43 0.00278 2.3563 29.5 0.104 0.00265 232.01 Kepler-122 c 12.465988 5.87 152.0 0.50 0.04420 0.6293 2215.1 5.063 67.00291 123.5 7 1 0.000009 1.16 74.2 +0.09-0.29 0.00067 0.1809 10.6 0.054 0.00047

– 63 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

232.02 Kepler-122 b 5.766193 2.34 432.8 0.00 0.01766 0.9045 370.0 3.846 67.01488 68.0 7 1 0.000016 0.46 211.4 +0.39-0.00 0.00030 0.1351 7.5 0.049 0.00173 232.03 Kepler-122 d 21.587475 2.20 73.8 0.01 0.01654 1.8633 324.3 4.683 75.97287 32.0 7 1 0.000164 0.44 36.0 +0.44-0.01 0.00052 0.3794 13.3 0.133 0.00379 232.04 Kepler-122 e 37.993273 2.60 34.4 0.84 0.01958 0.1641 354.5 7.155 96.01553 13.4 7 1 0.000390 0.54 16.8 +0.02-0.61 0.00125 0.3830 14.2 0.162 0.00579 232.05 56.257336 2.51 20.5 0.94 0.01889 0.0348 271.7 9.378 97.21733 9.8 7 1 0.001333 0.56 10.0 +0.00-0.66 0.00200 0.3609 16.9 0.224 0.01188 238.01 Kepler-123 b 17.232366 2.94 107.8 0.53 0.02134 1.0144 507.4 4.566 68.09113 66.5 7 1 0.000056 0.57 50.5 +0.06-0.45 0.00046 0.3976 10.6 0.066 0.00193 238.02 Kepler-123 c 26.695074 1.48 60.0 0.23 0.01070 2.3135 132.6 4.529 76.99812 15.2 7 1 0.000468 0.30 28.1 +0.21-0.23 0.00061 0.8053 13.4 0.347 0.01070 241.01 Kepler-124 c 13.821375 1.75 22.3 0.23 0.02524 2.6000 783.6 3.552 64.79391 79.8 7 1 0.000037 0.09 3.9 +0.19-0.23 0.00051 0.4824 12.7 0.049 0.00140 241.02 Kepler-124 d 30.950851 1.11 7.7 0.43 0.01600 2.7411 303.5 4.196 86.83698 25.8 7 1 0.000361 0.07 1.4 +0.03-0.41 0.00063 0.9706 17.7 0.220 0.00610 241.03 Kepler-124 b 3.410493 0.73 146.9 0.14 0.01047 2.1231 135.7 2.389 64.57549 19.5 7 1 0.000021 0.05 25.8 +0.31-0.14 0.00043 0.5601 8.1 0.113 0.00362 244.01 Kepler-25 c 12.720368 4.44 185.6 0.03 0.03108 6.5104 1171.5 2.623 111.52749 387.4 2 1 0.000003 0.08 15.9 +0.14-0.03 0.00009 0.3769 3.1 0.017 0.00015 244.02 Kepler-25 b 6.238542 2.58 483.7 0.06 0.01808 1.2293 396.9 3.558 104.70522 293.1 2 1 0.000004 0.05 41.5 +0.17-0.06 0.00009 0.0759 1.8 0.011 0.00035 245.01 Kepler-37 d 39.792222 1.91 10.2 0.34 0.02261 3.3768 605.2 4.459 108.24952 344.0 2 1 0.000024 0.07 1.2 +0.03-0.30 0.00023 0.4325 2.2 0.030 0.00034 245.02 Kepler-37 c 21.302011 0.73 23.4 0.13 0.00872 3.3074 91.9 3.789 124.83736 66.3 2 1 0.000056 0.03 2.9 +0.27-0.13 0.00015 0.5032 1.7 0.047 0.00154 245.03 Kepler-37 b 13.367568 0.31 44.1 0.14 0.00363 4.6705 15.9 2.872 117.03198 13.0 2 1 0.000211 0.02 5.4 +0.34-0.12 0.00022 1.4591 1.6 0.236 0.01035 246.01 Kepler-68 b 5.398759 2.30 405.1 0.09 0.01692 1.1699 345.0 3.437 106.85743 304.5 2 1 0.000003 0.04 33.1 +0.25-0.09 0.00015 0.1547 1.6 0.012 0.00031 246.02 Kepler-68 c 9.605080 0.92 188.1 0.07 0.00680 3.0507 55.5 2.997 69.38013 36.0 2 1 0.000054 0.03 15.4 +0.37-0.07 0.00021 0.6888 2.2 0.089 0.00374 248.01 Kepler-49 b 7.203871^{tt} 2.35 23.8 0.01 0.03845 4.2233 1834.8 2.526 103.28587 111.6 7 1 0.000008 0.09 4.0 +0.29-0.01 0.00040 0.3527 20.4 0.022 0.00064

– 64 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

248.02 Kepler-49 c 10.912732^{tt} 2.06 13.6 0.11 0.03381 10.1835 1413.3 2.141 102.85183 68.3 7 1 0.000021 0.09 2.4 +0.30-0.11 0.00067 1.6528 28.3 0.041 0.00108 248.03 Kepler-49 d 2.576549^{tt} 1.60 95.1 0.06 0.02630 5.7563 847.2 1.597 105.12932 68.0 7 1 0.000003 0.07 16.1 +0.27-0.06 0.00044 0.6475 16.5 0.023 0.00066 248.04 Kepler-49 e 18.596108^{tt} 1.56 6.8 0.27 0.02553 14.9314 793.1 2.164 74.26415 31.5 7 1 0.000079 0.08 1.1 +0.16-0.27 0.00088 3.7210 35.3 0.069 0.00242 250.01 Kepler-26 b 12.282972 2.94 14.6 0.11 0.04723 5.4312 2762.2 2.782 103.39854 143.7 7 1 0.000013 0.14 2.9 +0.23-0.11 0.00059 0.6829 25.9 0.024 0.00061 250.02 Kepler-26 c 17.251204 2.94 9.3 0.87 0.04710 2.7216 1929.4 2.216 82.88636 71.3 7 1 0.000034 0.31 1.8 +0.02-0.59 0.00449 7.3574 40.5 0.071 0.00109 250.03 Kepler-26 d 3.543919 1.07 77.7 0.31 0.01721 3.3427 356.1 2.012 69.25903 32.6 7 1 0.000015 0.06 15.4 +0.14-0.31 0.00063 1.0059 17.0 0.079 0.00253 250.04 Kepler-26 e 46.827915 2.41 2.4 0.77 0.03873 14.6749 1484.5 2.084 69.74318 36.2 7 1 0.000173 0.15 0.5 +0.03-0.12 0.00156 5.4962 61.1 0.103 0.00224 251.01 Kepler-125 b 4.164389 2.37 29.4 0.03 0.04234 6.8461 2217.9 1.798 104.08676 179.4 7 1 0.000003 0.10 7.1 +0.31-0.03 0.00049 0.7379 19.6 0.015 0.00037 251.02 Kepler-125 c 5.774464 0.74 19.0 0.12 0.01325 7.4935 218.6 1.878 65.96118 17.4 7 1 0.000047 0.05 4.5 +0.33-0.12 0.00078 2.3357 20.8 0.131 0.00468 253.01 6.383166 2.13 16.8 0.11 0.03681 11.4852 1669.3 1.726 103.60325 74.2 7 1 0.000009 0.08 3.8 +0.30-0.11 0.00073 1.8677 31.2 0.032 0.00072 253.02 20.618371 1.16 3.5 0.07 0.02012 6.3063 501.6 3.074 78.51002 15.4 2 1 0.000223 0.07 0.8 +0.40-0.07 0.00109 1.7797 39.8 0.187 0.00490 260.01 Kepler-126 b 10.495711 1.52 255.2 0.65 0.01023 0.3678 113.1 4.815 105.78966 77.0 5 1 0.000028 0.10 24.4 +0.19-0.44 0.00064 0.2867 1.8 0.046 0.00165 260.02 Kepler-126 d 100.283134 2.50 12.5 0.14 0.01686 0.6785 344.4 10.841 178.04434 109.4 5 1 0.000255 0.05 1.2 +0.19-0.14 0.00018 0.0766 3.4 0.055 0.00131 260.03 Kepler-126 c 21.869741 1.58 95.3 0.71 0.01069 0.4202 119.6 5.479 73.29159 66.8 5 1 0.000082 0.13 9.2 +0.04-0.50 0.00084 0.3494 2.3 0.066 0.00223 262.01 Kepler-50 b 7.812491 1.57 489.5 0.18 0.00909 1.0535 96.8 3.942 105.62936 55.0 2 1 0.000031 0.04 42.8 +0.28-0.18 0.00018 0.2233 2.2 0.071 0.00215 262.02 Kepler-50 c 9.376514 1.76 381.6 0.34 0.01017 7.3493 119.3 2.101 69.95872 53.9 2 1 0.000028 0.05 33.4 +0.14-0.34 0.00024 1.9506 3.3 0.051 0.00196 270.01 12.582270 1.51 170.3 0.15 0.00945 0.4068 108.2 6.387 108.02111 65.6 3 1 0.000051 0.04 19.8 +0.26-0.15 0.00018 0.0605 2.3 0.069 0.00236

– 65 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

270.02 33.672650 1.93 46.0 0.48 0.01207 0.3414 167.5 8.403 95.04088 61.6 3 1 0.000185 0.14 5.3 +0.03-0.45 0.00086 0.0935 3.3 0.099 0.00332 271.01 Kepler-127 d 48.630408 2.64 29.3 0.62 0.01782 0.6220 345.4 7.018 105.54709 97.4 5 1 0.000128 0.14 3.5 +0.18-0.42 0.00085 0.2757 4.1 0.056 0.00143 271.02 Kepler-127 c 29.393195 2.66 57.4 0.77 0.01794 0.2080 324.3 7.104 142.06708 120.4 5 1 0.000073 0.14 6.9 +0.07-0.52 0.00080 0.2559 3.4 0.074 0.00121 271.03 Kepler-127 b 14.435889 1.40 147.0 0.49 0.00941 2.0570 99.8 3.435 74.51140 41.3 5 1 0.000063 0.05 17.8 +0.05-0.45 0.00026 0.6941 3.3 0.075 0.00246 274.01 Kepler-128 b 15.090015 1.36 210.9 0.65 0.00750 0.9262 62.0 3.990 108.95329 23.1 5 1 0.000233 0.16 20.1 +0.10-0.46 0.00086 0.5918 4.0 0.281 0.00653 274.02 Kepler-128 c 22.802603 1.26 120.1 0.05 0.00696 1.4226 59.1 5.164 86.37509 20.6 5 1 0.000338 0.06 11.4 +0.40-0.05 0.00030 0.4084 4.1 0.312 0.00821 275.01 Kepler-129 b 15.791860 2.37 155.7 0.54 0.01325 0.2180 198.7 7.278 109.82166 79.4 5 1 0.000068 0.21 18.6 +0.03-0.46 0.00111 0.0764 3.8 0.075 0.00228 275.02 Kepler-129 c 82.200170 2.55 17.3 0.12 0.01423 0.5992 244.7 10.570 141.78963 53.0 5 1 0.000680 0.10 2.1 +0.31-0.12 0.00035 0.1070 6.6 0.163 0.00478 277.01 Kepler-36 c 16.230786^{tt} 3.60 176.3 0.02 0.02029 0.3408 501.5 7.531 104.69910 174.2 2 1 0.000023 0.05 12.0 +0.24-0.02 0.00014 0.0322 3.5 0.030 0.00080 277.02 Kepler-36 b 13.850962^{tt} 1.76 214.7 0.90 0.00994 0.0539 82.9 5.943 74.65273 17.5 2 1 0.000091 0.16 14.6 +0.04-0.63 0.00088 0.2382 3.4 0.110 0.00391 279.01 28.454915 6.06 81.5 0.47 0.03534 0.3464 1412.1 8.174 109.70506 439.1 3 1 0.000020 0.33 13.5 +0.06-0.19 0.00036 0.0715 5.1 0.047 0.00042 279.02 15.413017 2.48 183.3 0.05 0.01447 0.4802 245.2 6.559 69.94276 96.0 3 1 0.000049 0.14 30.4 +0.37-0.05 0.00024 0.0725 3.9 0.079 0.00193 282.01 Kepler-130 c 27.508653 2.81 45.0 0.11 0.02284 1.2135 632.7 5.857 115.10387 223.5 5 1 0.000033 0.09 5.0 +0.20-0.11 0.00018 0.1014 3.7 0.023 0.00065 282.02 Kepler-130 b 8.457458 1.02 218.3 0.12 0.00827 2.0930 82.6 3.248 72.06666 38.8 5 1 0.000039 0.04 23.9 +0.30-0.12 0.00023 0.3908 2.9 0.077 0.00269 282.03 Kepler-130 d 87.517905 1.64 9.6 0.84 0.01336 21.5948 163.0 1.824 134.15805 16.8 5 1 0.000744 0.16 1.1 +0.08-0.02 0.00127 6.5018 16.3 0.235 0.00467 283.01 Kepler-131 b 16.091958 2.18 65.7 0.15 0.01910 5.9622 437.6 2.856 103.59823 159.9 5 1 0.000017 0.27 19.5 +0.17-0.15 0.00018 0.5624 3.8 0.022 0.00060 283.02 Kepler-131 c 25.516979 0.87 35.5 0.43 0.00759 1.1362 67.0 5.238 87.42396 25.7 5 1 0.000259 0.11 10.6 +0.06-0.43 0.00028 0.4064 3.4 0.178 0.00576

– 66 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

284.01 Kepler-132 18.010199 1.55^∗ 87.2 0.01 0.01203 6.3898 170.7 2.910 112.42116 44.6 5 1 0.000067 0.30 42.8 +0.41-0.01 0.00029 1.1611 5.4 0.070 0.00212 284.02 Kepler-132 6.414914 1.28^∗ 348.8 0.08 0.00998 1.5388 117.3 3.300 102.63908 52.2 5 1 0.000019 0.25 171.3 +0.36-0.08 0.00022 0.2947 3.0 0.056 0.00185 284.03 Kepler-132 6.178196 1.21^∗ 359.3 0.26 0.00943 1.3906 103.9 3.264 101.86198 47.4 5 1 0.000022 0.24 176.4 +0.20-0.26 0.00022 0.3085 3.0 0.063 0.00190 285.01 13.748790 3.60 214.2 0.54 0.01934 0.3415 422.9 6.049 112.27996 141.5 3 1 0.000019 0.20 25.8 +0.06-0.39 0.00093 0.1793 3.2 0.039 0.00081 285.02 26.723332 2.69 89.1 0.84 0.01445 0.0629 194.1 8.771 80.93386 69.8 3 1 0.000127 0.22 10.8 +0.00-0.60 0.00110 0.1235 3.5 0.072 0.00272 285.03 49.356676 2.25 39.3 0.86 0.01208 0.0426 131.6 11.524 67.29189 30.4 3 1 0.000593 0.17 4.8 +0.03-0.62 0.00086 0.1097 4.3 0.193 0.00809 291.01 Kepler-133 c 31.517586 2.84 47.3 0.68 0.01827 0.2444 355.0 7.765 118.15322 71.5 7 1 0.000158 0.48 19.1 +0.13-0.46 0.00064 0.1589 7.0 0.089 0.00266 291.02 Kepler-133 b 8.129976 1.76 285.6 0.36 0.01130 6.5051 145.1 2.071 58.97047 28.9 7 1 0.000038 0.30 115.2 +0.08-0.36 0.00039 1.8640 7.7 0.093 0.00275 295.01 Kepler-134 b 5.317429 2.00 440.6 0.12 0.01555 1.8890 293.3 2.901 104.87608 107.8 7 1 0.000008 0.39 217.3 +0.23-0.12 0.00022 0.2198 3.9 0.031 0.00077 295.02 Kepler-134 c 10.105785 1.26 187.4 0.14 0.00984 9.7813 116.5 2.059 68.50716 26.3 7 1 0.000053 0.25 92.5 +0.30-0.14 0.00038 2.4200 6.5 0.102 0.00296 298.01 19.963577 1.61 42.9 0.27 0.01473 9.0377 258.1 2.597 111.30756 37.1 2 1 0.000078 0.05 0.0 +0.19-0.27 0.00046 2.1383 9.6 0.073 0.00235 298.02 57.383502 1.61 10.4 0.38 0.01475 8.3282 255.6 3.647 103.72803 24.9 7 1 0.000498 0.06 0.0 +0.11-0.38 0.00059 2.8898 14.3 0.161 0.00516 301.01 Kepler-135 b 6.002530 1.81 445.8 0.00 0.01301 0.8559 199.8 3.952 104.71611 77.3 7 1 0.000016 0.35 207.4 +0.42-0.00 0.00022 0.1398 3.6 0.045 0.00144 301.02 Kepler-135 c 11.448708 1.16 188.6 0.57 0.00836 0.4362 77.7 5.047 74.38697 24.7 7 1 0.000145 0.23 87.8 +0.38-0.35 0.00031 0.2071 4.4 0.178 0.00693 304.01 8.512039 2.41 150.8 0.05 0.02210 7.4550 576.4 2.172 107.90897 154.6 7 1 0.000007 0.48 73.3 +0.23-0.05 0.00017 0.6602 5.2 0.015 0.00044 304.02 5.518193 0.62 268.0 0.35 0.00572 2.6904 37.9 2.436 69.56026 12.9 2 1 0.000063 0.13 130.2 +0.08-0.35 0.00034 1.2127 4.0 0.222 0.00694 307.01 19.674096 1.82 80.3 0.62 0.01393 1.8727 210.4 3.582 109.27045 43.3 3 1 0.000082 0.38 40.0 +0.25-0.40 0.00100 0.9914 6.0 0.070 0.00212

– 67 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

307.02 5.211038 1.22 468.8 0.16 0.00930 1.3128 102.0 3.216 64.53614 42.4 3 1 0.000021 0.24 233.5 +0.33-0.16 0.00026 0.3218 3.5 0.072 0.00227 312.01 Kepler-136 b 11.578900 2.05 211.3 0.39 0.01387 3.4593 225.5 2.855 108.58649 60.5 7 1 0.000030 0.38 91.6 +0.05-0.39 0.00028 0.7941 5.1 0.045 0.00139 312.02 Kepler-136 c 16.399235 1.99 134.2 0.10 0.01343 3.3062 218.4 3.502 64.96851 56.0 7 1 0.000051 0.37 58.2 +0.37-0.10 0.00034 0.6737 5.2 0.056 0.00180 313.01 Kepler-137 c 18.735753 1.88 24.7 0.06 0.02146 6.1794 572.4 3.005 110.63394 90.8 7 1 0.000035 0.14 5.4 +0.39-0.06 0.00047 1.2085 8.8 0.040 0.00105 313.02 Kepler-137 b 8.436387 1.47 70.3 0.01 0.01679 2.2493 350.1 3.217 112.88640 86.8 7 1 0.000018 0.11 15.2 +0.43-0.01 0.00036 0.4020 5.9 0.039 0.00117 314.01 Kepler-138 c 13.781139^{tt} 1.42 8.0 0.41 0.02456 7.9636 704.5 2.296 110.85145 139.9 7 1 0.000011 0.10 3.0 +0.21-0.01 0.00050 1.3909 6.8 0.026 0.00049 314.02 Kepler-138 d 23.088713^{tt} 1.44 4.0 0.82 0.02498 7.5368 583.0 1.799 104.01479 75.7 7 1 0.000031 0.11 1.6 +0.05-0.01 0.00068 1.5698 10.8 0.038 0.00074 314.03 Kepler-138 b 10.312364^{tt} 0.61 11.6 0.53 0.01050 7.8853 125.1 1.920 66.54425 21.8 7 1 0.000036 0.05 4.3 +0.23-0.00 0.00048 1.8417 6.1 0.058 0.00191 316.01 Kepler-139 b 15.771044 2.94 91.8 0.06 0.02069 1.0818 517.6 5.068 117.90582 90.1 7 1 0.000037 0.57 42.4 +0.34-0.06 0.00032 0.1496 7.2 0.055 0.00130 316.02 Kepler-139 c 157.072878 3.38 4.3 0.83 0.02380 0.4706 535.1 8.517 414.26266 35.7 7 1 0.001720 0.69 2.0 +0.01-0.59 0.00154 0.8755 16.5 0.291 0.00440 321.01 2.426300 1.84 924.7 0.88 0.01456 0.1371 182.6 2.746 103.45696 98.4 7 1 0.000004 0.31 318.6 +0.00-0.61 0.00119 0.4038 2.7 0.025 0.00093 321.02 4.623364 0.93 388.5 0.32 0.00735 1.1896 64.1 3.061 65.37379 21.0 2 1 0.000024 0.14 133.8 +0.15-0.32 0.00028 0.3392 3.3 0.092 0.00331 327.01 Kepler-140 b 3.254270 1.61 999.9 0.05 0.01144 1.0790 154.6 2.978 105.66151 67.7 7 1 0.000008 0.31 472.8 +0.39-0.05 0.00023 0.2140 3.5 0.046 0.00133 327.02 Kepler-140 c 91.353282 1.80 11.8 0.13 0.01279 1.5740 193.6 7.919 122.60562 26.9 7 1 0.001370 0.35 5.6 +0.29-0.13 0.00042 0.2968 10.9 0.246 0.00874 338.01 Kepler-141 c 7.010606 1.41 71.8 0.31 0.01640 2.0197 330.3 2.986 107.57599 62.8 7 2 0.000020 0.09 13.9 +0.12-0.31 0.00038 0.4065 7.2 0.046 0.00142 338.02 Kepler-141 b 3.107675 0.69 211.8 0.54 0.00802 1.5077 73.5 2.218 65.63058 18.8 7 2 0.000022 0.05 41.0 +0.05-0.45 0.00041 0.7670 5.8 0.123 0.00374 339.01 1.980361 2.19 1843.9 0.71 0.01613 0.4538 271.1 2.467 103.13934 73.9 2 1 0.000004 0.47 858.5 +0.21-0.47 0.00160 0.3317 5.0 0.037 0.00094

– 68 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

339.02 12.834425 2.08 156.0 0.55 0.01531 1.8939 259.7 3.278 71.32518 36.1 2 1 0.000070 0.40 72.7 +0.40-0.34 0.00046 1.3289 9.9 0.093 0.00286 341.01 7.170732 2.62 127.0 0.20 0.02640 2.4611 844.9 2.926 109.66409 86.2 2 1 0.000014 0.38 45.9 +0.18-0.20 0.00046 0.3572 13.9 0.037 0.00101 341.02 4.699595 1.52 227.9 0.16 0.01531 2.1037 285.9 2.671 110.61567 33.8 7 1 0.000025 0.22 82.4 +0.28-0.16 0.00052 0.4685 12.6 0.083 0.00243 343.01 Kepler-142 c 4.761702 2.86 498.5 0.37 0.02061 0.9612 493.6 3.303 103.33543 151.9 7 1 0.000005 0.55 228.5 +0.14-0.29 0.00026 0.1746 4.2 0.024 0.00060 343.02 Kepler-142 b 2.024152 1.99 1581.8 0.49 0.01436 0.7948 232.9 2.489 103.49468 102.6 7 1 0.000003 0.39 725.2 +0.09-0.41 0.00029 0.2718 3.2 0.027 0.00078 343.03 Kepler-142 d 41.809118 2.16 27.7 0.94 0.01557 0.0281 183.2 8.687 81.69926 31.4 7 1 0.000562 0.47 12.7 +0.00-0.65 0.00156 0.3664 8.1 0.240 0.00831 351.01 Kepler-90 h 331.643079^{tt} 12.66 2.4 0.01 0.08246 1.1836 8039.8 14.417 73.47704 212.8 7 2 0.001050 2.36 1.0 +0.12-0.01 0.00022 0.0221 34.9 0.037 0.00076 351.02 Kepler-90 g 210.604931^{tt} 9.16 4.3 0.04 0.05970 1.2032 4209.7 12.056 80.05087 217.4 6 2 0.000424 1.71 1.9 +0.14-0.04 0.00024 0.0448 23.2 0.046 0.00107 351.03 Kepler-90 d 59.737627^{tt} 3.41 23.2 0.23 0.02224 0.9457 572.4 8.077 91.95611 47.0 7 1 0.000323 0.64 10.2 +0.19-0.23 0.00044 0.1575 14.0 0.101 0.00281 351.04 Kepler-90 e 91.937383^{tt} 3.21 13.0 0.09 0.02090 1.0316 508.3 9.250 67.31141 36.2 2 1 0.000811 0.60 5.8 +0.36-0.09 0.00053 0.1908 16.8 0.160 0.00517 351.05 Kepler-90 c 8.719796^{tt} 1.79 299.1 0.29 0.01165 1.2860 154.0 3.741 72.52305 22.9 2 1 0.000097 0.34 132.2 +0.15-0.29 0.00044 0.4246 9.9 0.200 0.00614 351.06 Kepler-90 b 7.008261^{tt} 1.67 401.0 0.27 0.01091 1.1225 134.1 3.656 70.66911 18.7 7 1 0.000040 0.32 177.3 +0.18-0.27 0.00040 0.2628 7.8 0.089 0.00336 352.01 Kepler-143 c 27.082511 3.37 59.0 0.89 0.02273 0.2108 443.8 5.103 124.80613 42.4 7 1 0.000169 0.84 35.1 +0.01-0.63 0.00190 0.8675 13.5 0.067 0.00333 352.02 Kepler-143 b 16.007583 2.41 119.9 0.79 0.01625 23.6082 251.8 1.133 75.63677 18.9 7 1 0.000093 0.60 71.3 +0.12-0.00 0.00134 6.0023 26.6 0.108 0.00321 353.01 152.104780 11.83 10.5 0.89 0.06404 0.6408 3630.9 7.445 109.52963 139.0 7 0 0.000342 2.64 5.5 +0.00-0.01 0.00057 0.0596 35.7 0.088 0.00118 353.02 30.652731 2.87 88.3 0.28 0.01554 2.0113 277.7 4.920 68.04432 27.3 7 1 0.000259 0.65 46.5 +0.15-0.28 0.00049 0.4876 14.3 0.136 0.00494 369.01 Kepler-144 b 5.885273 1.33 426.8 0.34 0.00990 6.4802 113.1 1.873 107.42565 40.1 5 1 0.000020 0.26 202.5 +0.11-0.34 0.00027 1.8020 4.4 0.059 0.00193

– 69 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

369.02 Kepler-144 c 10.104665 1.35 210.4 0.25 0.01000 6.7690 115.9 2.278 68.55344 34.0 5 1 0.000043 0.26 99.8 +0.19-0.25 0.00030 1.6501 5.0 0.080 0.00259 370.01 Kepler-145 c 42.882324 3.67 63.1 0.03 0.01819 0.4164 389.0 9.713 136.64890 109.1 5 1 0.000147 0.10 7.8 +0.27-0.03 0.00017 0.0326 4.7 0.058 0.00185 370.02 Kepler-145 b 22.950666 2.11 145.8 0.20 0.01047 2.2177 127.7 4.391 84.53126 37.4 5 1 0.000144 0.08 17.9 +0.27-0.20 0.00031 0.5090 5.0 0.111 0.00345 376.01 44.146143 53.01 37.5 1.34 0.40099 0.7663 3071.3 3.205 144.53418 82.9 1 0 0.000116 49.76 38.9 +0.61-0.07 0.33174 0.1058 137.0 0.076 0.00128 376.02 1.411631 2.92 3589.2 0.54 0.02210 5.6217 534.5 1.121 111.26252 77.9 0 1 0.000002 1.31 3714.9 +0.04-0.46 0.00163 1.9480 10.9 0.025 0.00064 377.01 Kepler-9 b 19.268818^{tt} 8.00 44.8 0.43 0.07590 2.1542 6686.1 4.175 115.58183 124.0 7 2 0.000007 0.79 11.5 +0.06-0.12 0.00073 0.3020 15.6 0.030 0.00018 377.02 Kepler-9 c 38.909554^{tt} 8.10 17.5 0.76 0.07686 1.4152 5937.6 4.708 108.42008 37.9 2 2 0.000023 0.80 4.5 +0.02-0.01 0.00055 0.1149 19.0 0.038 0.00030 377.03 Kepler-9 d 1.592983^{tt} 1.55 1273.3 0.03 0.01467 2.5328 261.4 1.775 115.08343 20.4 2 1 0.000003 0.16 326.7 +0.30-0.03 0.00026 0.3144 5.9 0.030 0.00099 379.01 6.717256 3.14 593.0 0.81 0.01717 0.7814 282.6 2.547 103.99662 56.1 0 1 0.000020 0.66 274.0 +0.06-0.56 0.00129 1.4272 7.8 0.052 0.00164 379.02 23.136555 1.88 114.4 0.77 0.01030 0.6605 107.2 4.328 85.19109 16.3 7 1 0.000555 0.39 52.9 +0.01-0.55 0.00065 1.9141 13.0 0.536 0.01421 386.01 Kepler-146 b 31.158799 3.71 40.9 0.21 0.02813 1.9138 930.3 5.189 106.90272 74.4 7 1 0.000079 0.70 18.2 +0.17-0.21 0.00044 0.2964 16.3 0.051 0.00150 386.02 Kepler-146 c 76.732171 3.13 12.3 0.12 0.02377 2.8336 667.2 6.216 133.67082 40.2 7 1 0.000609 0.59 5.5 +0.32-0.12 0.00059 0.5502 23.0 0.124 0.00387 392.01 Kepler-147 c 33.416423 2.43 54.0 0.02 0.01519 0.7600 278.2 7.293 104.33383 29.4 7 1 0.000416 0.49 25.0 +0.44-0.02 0.00051 0.1636 12.8 0.209 0.00720 392.02 Kepler-147 b 12.610584 1.53 197.3 0.51 0.00956 0.8048 102.0 4.448 71.19015 13.5 7 1 0.000228 0.31 91.4 +0.01-0.46 0.00054 0.3660 10.5 0.318 0.01042 398.01 51.846820 8.91 7.1 0.69 0.09590 2.4560 9680.3 4.791 103.08115 313.0 7 0 0.000037 4.32 8.2 +0.02-0.03 0.00090 0.2403 40.8 0.047 0.00043 398.02 Kepler-148 c 4.180043 3.60 200.3 0.48 0.03870 1.8069 1739.4 2.482 106.71928 156.4 7 1 0.000004 1.76 233.7 +0.08-0.39 0.00243 0.4299 15.9 0.027 0.00054 398.03 Kepler-148 b 1.729366 1.80 638.6 0.05 0.01933 2.8654 461.3 1.757 66.81853 57.0 7 1 0.000004 0.87 745.1 +0.35-0.05 0.00047 0.4726 12.4 0.040 0.00133

– 70 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

401.01 Kepler-149 b 29.198943 4.21 20.1 0.02 0.04044 2.1224 2034.7 5.074 118.44022 185.1 7 1 0.000041 0.60 7.3 +0.32-0.02 0.00049 0.2231 15.6 0.034 0.00076 401.02 Kepler-149 d 160.018032 3.96 2.1 0.62 0.03803 5.6858 1591.2 5.150 184.28348 59.4 7 1 0.001096 0.68 0.8 +0.02-0.48 0.00363 2.8365 43.2 0.142 0.00324 401.03 Kepler-149 c 55.328328 1.61 8.6 0.50 0.01546 0.9665 279.2 6.948 119.32665 23.0 7 1 0.001946 0.24 3.1 +0.43-0.29 0.00077 0.4673 20.5 0.431 0.01752 408.01 Kepler-150 c 7.381998 3.69 141.5 0.53 0.03595 1.4366 1456.1 3.124 106.07123 129.5 7 1 0.000010 0.59 51.5 +0.29-0.31 0.00232 0.4814 14.8 0.044 0.00070 408.02 Kepler-150 d 12.560930 2.79 69.7 0.12 0.02725 2.1108 893.9 3.764 99.79588 70.6 7 1 0.000036 0.41 25.4 +0.33-0.12 0.00057 0.3999 17.4 0.051 0.00158 408.03 Kepler-150 e 30.826557 3.12 21.1 0.93 0.03042 0.1396 720.5 5.455 86.01043 45.4 7 1 0.000199 0.55 7.7 +0.01-0.64 0.00305 1.0945 23.4 0.199 0.00373 408.04 Kepler-150 b 3.428054 1.25 389.5 0.08 0.01221 2.4216 177.9 2.309 65.36794 23.7 7 1 0.000026 0.19 141.7 +0.36-0.08 0.00053 0.6545 12.0 0.122 0.00416 413.01 Kepler-151 b 15.228958 3.06 40.7 0.79 0.03380 2.0416 1109.7 2.645 109.55979 77.0 7 1 0.000030 1.53 48.1 +0.00-0.57 0.00204 3.1017 20.8 0.060 0.00110 413.02 Kepler-151 c 24.674612 2.09 21.4 0.06 0.02307 8.0939 652.3 3.014 79.77073 40.0 7 1 0.000106 1.04 25.3 +0.40-0.06 0.00066 1.7626 22.5 0.084 0.00260 414.01 20.355093 17.80 64.3 0.50 0.14914 1.2472 25062.0 5.332 108.34310 2261.3 0 0 0.000003 8.84 74.8 +0.01-0.01 0.00014 0.0138 17.9 0.007 0.00007 414.02 5.922429 2.49 326.5 0.83 0.02087 0.3187 411.6 3.237 106.81567 49.7 0 1 0.000021 1.25 380.1 +0.05-0.57 0.00150 0.6301 11.6 0.064 0.00196 416.01 Kepler-152 b 18.207973 2.79 20.4 0.03 0.03528 3.2113 1546.5 3.756 118.84202 150.0 7 1 0.000023 0.17 4.1 +0.30-0.03 0.00044 0.3149 14.4 0.026 0.00069 416.02 Kepler-152 c 88.255055 2.39 2.5 0.25 0.03023 11.2809 1120.1 4.036 86.78027 61.8 7 1 0.000309 0.16 0.5 +0.19-0.25 0.00076 2.4575 25.3 0.084 0.00195 427.01 24.614858 3.43 23.7 0.50 0.03637 7.9533 1513.5 2.686 124.73956 78.3 2 1 0.000047 1.89 30.6 +0.34-0.32 0.00302 4.8166 27.6 0.066 0.00108 427.02 42.950173 2.49 11.3 0.04 0.02637 2.5183 854.2 5.374 86.73129 41.7 2 1 0.000230 1.36 14.6 +0.41-0.04 0.00068 0.4594 23.6 0.094 0.00293 431.01 Kepler-153 b 18.870227 2.92 36.5 0.03 0.03002 5.9768 1101.7 3.075 111.71046 79.9 7 1 0.000039 1.76 51.6 +0.41-0.03 0.00062 0.9735 18.6 0.042 0.00116 431.02 Kepler-153 c 46.902320 2.53 10.8 0.29 0.02600 6.7381 811.6 3.826 87.30653 44.7 7 1 0.000215 1.52 15.3 +0.17-0.29 0.00070 1.5461 23.6 0.082 0.00266

– 71 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

433.01 4.030466 4.18 191.7 0.05 0.04694 1.8204 2732.1 2.778 104.09135 160.4 7 1 0.000003 0.30 41.8 +0.27-0.05 0.00048 0.1815 16.8 0.021 0.00037 433.02 328.240497 10.34 0.5 0.77 0.11603 0.8035 13268.4 12.242 132.20288 332.3 2 0 0.000755 0.72 0.2 +0.01-0.01 0.00062 0.0348 64.0 0.079 0.00096 435.01 20.549836 4.12 45.3 0.77 0.03772 0.3247 1419.9 5.644 111.94547 102.5 2 1 0.000043 0.80 20.8 +0.03-0.41 0.00155 0.3662 15.3 0.116 0.00116 435.02 484.742808 9.40 0.7 0.61 0.08601 0.5190 8085.0 17.893 590.26935 161.8 2 0 0.545389 1.79 0.3 +0.03-0.06 0.00085 0.0673 55.1 0.179 0.00122 435.03 Kepler-154 b 33.040532 2.26 24.0 0.37 0.02065 6.3762 495.9 3.355 94.22087 27.1 6 1 0.000215 0.44 11.0 +0.20-0.26 0.00074 1.3554 23.3 0.108 0.00429 435.04 3.932725 1.78 408.0 0.92 0.01625 0.0911 211.7 3.093 67.65263 19.9 2 1 0.000025 0.38 187.3 +0.01-0.66 0.00155 0.5772 9.6 0.089 0.00286 435.05 Kepler-154 c 62.303276 2.95 10.2 0.70 0.02699 0.5319 766.7 7.510 112.09423 48.9 7 1 0.000406 0.62 4.7 +0.03-0.51 0.00241 0.4262 20.6 0.133 0.00385 438.01 Kepler-155 b 5.931194 2.09 45.3 0.67 0.03086 1.8072 1016.3 2.371 107.79655 108.2 7 1 0.000008 0.21 8.3 +0.00-0.51 0.00268 1.0772 13.9 0.029 0.00074 438.02 Kepler-155 c 52.661793 2.24 2.4 0.78 0.03311 4.2819 1057.1 3.188 116.51681 46.3 7 1 0.000236 0.15 0.5 +0.03-0.14 0.00150 2.0454 32.2 0.099 0.00237 439.01 1.902210 4.38 769.5 0.05 0.04200 1.7113 2185.9 2.203 103.44884 375.7 7 1 0.000001 0.64 284.4 +0.17-0.05 0.00021 0.0788 8.9 0.008 0.00019 439.02 5.405360 1.33 192.4 0.93 0.01273 2.9968 119.7 0.966 64.88348 5.4 -1 1 0.000119 0.43 71.1 +0.06-0.39 0.00364 2.2349 33.2 0.718 0.01517 440.01 Kepler-156 c 15.906801 2.55 28.7 0.64 0.02895 1.1250 917.0 3.984 110.93315 81.5 7 1 0.000045 0.19 6.0 +0.08-0.45 0.00110 0.6643 14.6 0.054 0.00154 440.02 Kepler-156 b 4.973456 2.30 134.6 0.69 0.02614 4.7268 716.4 1.579 103.88529 74.5 7 1 0.000008 0.17 28.4 +0.03-0.21 0.00099 1.7607 14.6 0.037 0.00089 442.01 Kepler-157 c 13.540500 2.24 89.6 0.34 0.01961 1.1007 449.8 4.514 104.68032 54.8 7 1 0.000049 0.43 42.5 +0.14-0.30 0.00040 0.2376 10.5 0.074 0.00219 442.02 Kepler-157 b 1.732342 1.32 1382.9 0.02 0.01160 1.4658 160.1 2.186 67.53020 44.0 7 1 0.000006 0.26 655.5 +0.42-0.02 0.00034 0.3178 6.0 0.062 0.00205 446.01 Kepler-158 b 16.709184 2.12 12.9 0.86 0.03109 1.1844 827.1 2.765 107.75561 43.5 7 1 0.000064 0.36 5.5 +0.05-0.59 0.00343 3.0818 26.6 0.081 0.00193 446.02 Kepler-158 c 28.551383 1.90 6.4 0.61 0.02790 1.7664 866.3 4.248 118.47678 41.9 7 1 0.000140 0.30 2.8 +0.08-0.43 0.00251 0.8512 29.7 0.089 0.00247

– 72 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

448.01 Kepler-159 b 10.139623^{tt} 2.38 26.8 0.68 0.03292 2.0392 1146.7 2.692 111.44948 75.6 7 1 0.000022 0.18 5.1 +0.06-0.47 0.00178 1.6896 22.0 0.049 0.00119 448.02 Kepler-159 c 43.595792^{tt} 3.41 3.8 0.78 0.04707 0.9041 2126.0 5.153 127.54523 57.5 7 1 0.000125 0.28 0.8 +0.06-0.54 0.00294 1.1700 61.2 0.143 0.00135 456.01 Kepler-160 c 13.699087 3.61 69.3 0.88 0.03737 0.1740 1225.8 4.807 104.48747 119.9 7 1 0.000031 1.77 79.6 +0.04-0.23 0.00218 0.2920 14.5 0.194 0.00127 456.02 Kepler-160 b 4.309427 1.54 329.2 0.68 0.01597 0.5828 270.0 3.022 67.03257 39.3 7 1 0.000017 0.76 378.1 +0.04-0.48 0.00130 0.3630 10.2 0.072 0.00245 457.01 Kepler-161 b 4.921355 2.12 132.6 0.02 0.02411 6.7916 731.0 1.873 107.29899 97.7 7 1 0.000006 0.14 27.6 +0.41-0.02 0.00054 1.2450 10.4 0.028 0.00070 457.02 Kepler-161 c 7.064240 2.05 83.6 0.20 0.02334 24.4085 672.5 1.351 68.37914 66.3 7 1 0.000011 0.15 17.4 +0.43-0.02 0.00082 4.4601 16.4 0.055 0.00092 459.01 Kepler-162 c 19.446355 3.03 50.1 0.54 0.02895 2.5025 941.0 3.527 103.10194 83.2 7 1 0.000045 1.63 62.4 +0.36-0.33 0.00250 1.7298 14.7 0.063 0.00131 459.02 Kepler-162 b 6.919798 1.26 197.4 0.27 0.01207 1.4637 174.3 3.339 67.11914 30.3 7 1 0.000052 0.67 246.1 +0.18-0.27 0.00043 0.3602 8.7 0.105 0.00403 464.01 58.361945 7.19 9.6 0.29 0.06718 2.1226 5425.3 6.308 129.55495 348.2 7 0 0.000047 3.13 10.1 +0.14-0.19 0.00057 0.2378 19.7 0.037 0.00041 464.02 5.350162 2.67 232.6 0.01 0.02494 4.1370 760.3 2.274 128.76007 106.5 7 1 0.000007 1.16 244.0 +0.40-0.01 0.00044 0.6314 10.2 0.026 0.00072 471.01 Kepler-163 c 21.347262 2.26 36.3 0.15 0.02254 3.4948 612.3 3.765 104.73590 50.4 7 1 0.000081 0.94 36.1 +0.33-0.15 0.00055 0.7534 15.4 0.079 0.00225 471.02 Kepler-163 b 7.810937 1.05 137.7 0.55 0.01047 1.0624 122.7 3.359 65.30430 14.2 7 1 0.000107 0.44 137.3 +0.05-0.45 0.00053 0.5447 10.5 0.176 0.00674 474.01 Kepler-164 c 10.945723 2.73 150.7 0.51 0.02182 2.3787 534.7 3.004 109.72046 62.3 7 1 0.000029 0.52 69.6 +0.06-0.42 0.00045 1.5381 11.6 0.049 0.00149 474.02 Kepler-164 d 28.986769 2.45 40.5 0.28 0.01955 5.6417 445.9 3.444 67.78268 35.1 7 1 0.000162 0.47 18.7 +0.19-0.28 0.00057 1.3236 17.0 0.089 0.00338 474.03 94.879122 4.27 8.4 0.97 0.03408 0.1373 783.5 6.485 147.84697 34.2 7 1 0.001040 1.05 3.9 +0.01-0.60 0.00524 2.3644 37.8 0.473 0.00465 474.04 Kepler-164 b 5.035030 1.41 421.4 0.08 0.01125 9.6995 147.8 1.649 65.65465 19.9 7 1 0.000027 0.28 194.7 +0.37-0.08 0.00052 2.7965 10.9 0.100 0.00338 475.01 Kepler-165 b 8.180848 2.32 75.5 0.78 0.02756 0.8947 745.8 2.869 109.70113 52.9 7 1 0.000026 1.41 108.2 +0.00-0.54 0.00153 1.0959 18.9 0.050 0.00176

– 73 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

475.02 Kepler-165 c 15.312990 2.23 32.3 0.06 0.02655 5.0065 875.9 3.028 104.79196 49.8 7 1 0.000057 1.35 46.4 +0.38-0.06 0.00074 0.9884 23.7 0.065 0.00192 481.01 Kepler-166 b 7.650254 2.27 81.6 0.09 0.02798 3.3384 956.1 2.749 104.97149 98.6 7 1 0.000012 1.17 100.0 +0.33-0.09 0.00052 0.5578 12.7 0.031 0.00088 481.02 1.554001 1.51 676.8 0.04 0.01860 2.5324 422.8 1.767 102.83018 78.0 7 1 0.000002 0.78 829.3 +0.39-0.04 0.00039 0.4294 7.9 0.028 0.00081 481.03 Kepler-166 c 34.260281 2.38 11.1 0.23 0.02938 2.5709 1045.4 4.840 116.22653 71.2 7 1 0.000124 1.23 13.6 +0.18-0.23 0.00057 0.4337 19.4 0.064 0.00208 489.01 2.217035 5.55 2133.4 0.99 0.03784 0.0426 550.5 2.564 104.69512 66.4 1 0 0.000005 4.62 1692.5 +0.06-0.03 0.02897 0.0097 15.9 0.093 0.00137 489.02 8.874769 1.41 337.7 0.09 0.00960 0.1402 108.8 8.181 73.18640 6.3 -1 1 0.001696 0.49 267.9 +0.38-0.09 0.00114 0.1498 25.0 1.594 0.04818 490.01 Kepler-167 b 4.393147 1.45 99.6 0.18 0.01902 2.6684 450.3 2.412 105.86732 35.4 7 1 0.000010 0.09 19.0 +0.27-0.18 0.00050 0.5437 9.9 0.041 0.00120 490.02 800.0000 9.30 0.1 0.27 0.12237 2.0654 18535.3 16.158 353.28668 314.9 2 0 – 0.50 0.0 +0.06-0.09 0.00079 0.1285 57.8 0.077 0.00051 490.03 Kepler-167 c 7.406097 1.37 49.6 0.13 0.01801 2.6589 406.9 2.894 67.07393 33.6 7 1 0.000026 0.08 9.4 +0.32-0.13 0.00050 0.5353 11.6 0.062 0.00198 490.04 21.803971 1.10 11.9 0.09 0.01451 5.7945 265.4 3.200 72.06544 13.0 2 1 0.000237 0.08 2.2 +0.38-0.09 0.00068 1.5905 17.6 0.164 0.00606 497.01 Kepler-168 c 13.193242 2.69 126.9 0.02 0.02228 0.9891 564.8 4.936 108.60934 55.9 7 1 0.000049 1.21 133.9 +0.41-0.02 0.00047 0.1666 13.9 0.087 0.00211 497.02 Kepler-168 b 4.425391 1.46 544.7 0.18 0.01206 0.8542 171.1 3.514 67.56055 23.6 7 1 0.000033 0.66 574.4 +0.27-0.18 0.00044 0.2089 10.1 0.130 0.00371 500.01 Kepler-80 b 7.053458^{tt} 2.66 38.9 0.81 0.03825 0.8729 1348.9 2.651 109.47645 90.0 7 1 0.000012 0.22 5.2 +0.02-0.56 0.00286 1.2641 19.3 0.034 0.00086 500.02 Kepler-80 c 9.521772^{tt} 2.85 26.3 0.86 0.04094 0.8528 1412.5 2.648 110.47812 85.1 7 1 0.000018 0.29 3.5 +0.02-0.59 0.00392 2.1570 23.0 0.057 0.00097 500.03 Kepler-80 d 3.072186^{tt} 1.74 120.1 0.90 0.02499 0.3884 479.5 1.989 67.02149 44.0 7 1 0.000010 0.20 16.0 +0.00-0.64 0.00277 1.6765 16.1 0.038 0.00169 500.04 Kepler-80 e 4.645387^{tt} 1.64 68.5 0.77 0.02364 1.5031 539.0 1.989 67.58736 39.0 7 1 0.000015 0.21 9.1 +0.14-0.54 0.00294 2.3028 19.0 0.055 0.00168 500.05 0.986784^{tt} 1.41 569.0 0.83 0.02028 0.8849 360.2 1.293 66.16814 43.2 7 1 0.000002 0.16 75.9 +0.01-0.59 0.00221 1.5154 10.7 0.034 0.00115

– 74 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

505.01 Kepler-169 e 13.767102 2.20 29.5 0.79 0.02637 1.3071 666.1 2.912 107.81064 51.7 7 1 0.000034 0.29 6.0 +0.11-0.54 0.00304 1.8214 15.2 0.081 0.00145 505.02 Kepler-169 c 6.195469 1.21 84.5 0.04 0.01457 1.9114 267.4 3.056 67.71616 29.7 7 1 0.000029 0.08 17.0 +0.42-0.04 0.00047 0.4602 9.8 0.091 0.00275 505.03 Kepler-169 b 3.250619 1.13 203.0 0.47 0.01353 2.0592 214.8 2.135 66.69209 27.7 7 1 0.000013 0.08 40.9 +0.43-0.26 0.00048 0.7200 8.8 0.078 0.00232 505.04 Kepler-169 d 8.348125 1.25 57.8 0.04 0.01496 3.3861 283.0 2.790 69.84117 27.3 7 1 0.000041 0.09 11.7 +0.40-0.04 0.00049 0.7097 11.6 0.086 0.00249 505.05 Kepler-169 f 87.090195 2.58 2.5 0.56 0.03095 1.9125 1095.5 6.313 120.31840 57.6 7 1 0.000406 0.24 0.5 +0.03-0.41 0.00214 0.6610 23.4 0.114 0.00276 505.06 29.876783 0.74 10.5 0.67 0.00889 0.0507 82.8 12.822 67.01902 7.1 2 1 0.001642 0.16 2.1 +0.27-0.46 0.00181 0.0418 10.5 1.313 0.03451 508.01 Kepler-170 b 7.930592 3.20 155.8 0.76 0.02832 0.4478 802.4 3.680 102.51582 91.5 7 1 0.000014 0.22 23.8 +0.03-0.52 0.00118 0.4716 12.0 0.038 0.00106 508.02 Kepler-170 c 16.665863 2.86 58.1 0.42 0.02530 1.5606 752.3 4.200 113.20177 63.8 7 1 0.000053 0.17 8.9 +0.05-0.38 0.00052 0.3323 15.4 0.065 0.00169 509.01 Kepler-171 b 4.166972 2.34 255.3 0.05 0.02556 1.8423 787.1 2.741 102.71415 93.2 7 1 0.000007 1.05 274.1 +0.34-0.05 0.00040 0.2814 12.3 0.035 0.00098 509.02 Kepler-171 c 11.463462 2.56 66.5 0.04 0.02791 6.2050 938.5 2.566 70.38428 67.4 7 1 0.000026 1.15 71.3 +0.35-0.04 0.00053 0.9426 19.6 0.044 0.00138 509.03 Kepler-171 d 39.595519 1.89 12.8 0.58 0.02067 0.7891 472.6 6.315 101.11922 22.4 7 1 0.000699 0.90 13.8 +0.01-0.48 0.00337 0.3949 25.0 0.277 0.01042 510.01 Kepler-172 b 2.940309 2.35 614.0 0.14 0.01985 1.4721 480.7 2.595 102.90340 56.3 7 1 0.000007 0.42 262.4 +0.29-0.14 0.00046 0.2629 10.7 0.049 0.00119 510.02 Kepler-172 c 6.388996 2.86 212.5 0.81 0.02417 0.3493 557.6 3.389 108.47434 52.2 7 1 0.000020 0.53 90.8 +0.09-0.55 0.00141 0.6344 13.6 0.077 0.00188 510.03 Kepler-172 d 14.627119 2.25 70.6 0.05 0.01898 2.9294 440.6 3.541 69.23672 28.7 7 1 0.000105 0.40 30.2 +0.41-0.05 0.00067 0.6912 21.1 0.151 0.00355 510.04 Kepler-172 e 35.118736 2.76 22.1 0.60 0.02329 3.7177 598.6 3.559 85.11935 26.1 7 1 0.000253 0.56 9.4 +0.01-0.48 0.00230 2.1940 29.0 0.150 0.00408 511.01 Kepler-173 c 8.005777 2.43 194.7 0.37 0.02343 1.9137 637.3 3.129 103.50340 91.6 7 1 0.000015 1.21 227.7 +0.19-0.27 0.00038 0.4365 9.4 0.037 0.00116 511.02 Kepler-173 b 4.263742 1.29 462.8 0.25 0.01246 2.9422 182.2 2.261 66.72031 30.6 7 1 0.000021 0.64 541.2 +0.19-0.25 0.00039 0.7086 8.3 0.075 0.00283

– 75 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

518.01 Kepler-174 b 13.981790 1.96 19.6 0.22 0.02883 4.7366 1035.2 2.938 114.97351 100.8 7 1 0.000024 0.11 4.1 +0.20-0.21 0.00059 0.7907 13.7 0.035 0.00095 518.02 Kepler-174 c 44.000529 1.49 4.3 0.11 0.02188 2.8089 604.1 5.177 143.75908 43.2 7 1 0.000265 0.09 0.9 +0.32-0.11 0.00061 0.5009 18.4 0.090 0.00312 518.03 Kepler-174 d 247.353730 2.19 0.4 0.09 0.03226 3.3584 1315.6 8.773 297.15875 58.2 7 1 0.002001 0.13 0.1 +0.36-0.09 0.00084 0.6113 31.5 0.142 0.00346 519.01 Kepler-175 b 11.903515 2.56 112.0 0.09 0.02321 1.4199 642.2 4.215 111.34082 49.1 7 1 0.000046 1.28 130.9 +0.37-0.09 0.00057 0.2677 17.6 0.070 0.00200 519.02 Kepler-175 c 34.035257 3.10 27.2 0.85 0.02816 0.1604 734.2 7.057 67.42290 44.2 7 1 0.000279 1.56 31.8 +0.07-0.62 0.00170 0.3912 21.9 0.123 0.00426 520.01 Kepler-176 c 12.759712 2.60 51.2 0.47 0.02677 1.8431 836.8 3.541 103.31062 75.8 7 1 0.000033 1.33 62.8 +0.16-0.35 0.00066 0.5020 15.1 0.054 0.00146 520.02 Kepler-176 b 5.433074 1.43 158.3 0.07 0.01470 3.4150 265.8 2.407 71.36967 31.8 7 1 0.000024 0.73 194.0 +0.39-0.07 0.00055 0.8315 11.9 0.082 0.00268 520.03 Kepler-176 d 25.751974 2.51 20.0 0.66 0.02581 4.5540 715.2 2.853 69.44951 43.6 7 1 0.000115 1.32 24.6 +0.25-0.45 0.00305 4.3815 23.5 0.087 0.00247 523.01 Kepler-177 c 49.411689 7.11 20.5 0.89 0.06051 0.5488 3172.6 5.251 131.23477 139.3 7 2 0.000095 3.68 24.6 +0.01-0.01 0.00073 0.0648 33.2 0.081 0.00100 523.02 Kepler-177 b 36.855830 3.36 30.3 0.86 0.02857 0.1051 744.6 8.157 71.91608 47.0 7 1 0.000266 1.75 36.5 +0.00-0.61 0.00169 0.2745 20.3 0.119 0.00380 528.01 Kepler-178 b 9.576694 2.90 146.1 0.49 0.02492 1.5282 709.3 3.377 109.68127 81.5 7 1 0.000021 1.25 149.8 +0.01-0.44 0.00157 0.8437 12.1 0.044 0.00124 528.02 Kepler-178 d 96.678988 3.95 6.7 0.87 0.03390 0.5951 1024.3 6.276 73.17842 47.0 7 1 0.000702 1.70 6.8 +0.06-0.59 0.00215 1.6774 29.6 0.206 0.00387 528.03 Kepler-178 c 20.552802 2.88 52.3 0.37 0.02477 14.1928 718.4 2.205 78.02634 47.6 7 1 0.000066 1.23 53.7 +0.09-0.37 0.00067 3.8702 22.0 0.067 0.00201 534.01 Kepler-179 c 6.400130 2.00 99.5 0.03 0.02410 9.2733 719.0 1.842 107.02343 55.2 7 1 0.000017 0.81 98.7 +0.44-0.03 0.00070 2.0133 20.7 0.052 0.00136 534.02 Kepler-179 b 2.735926 1.64 314.4 0.57 0.01981 1.7772 441.5 1.987 104.09382 50.8 7 1 0.000008 0.68 311.8 +0.04-0.47 0.00173 0.6995 13.0 0.051 0.00156 542.01 Kepler-180 c 41.885775 3.01 20.8 0.75 0.02597 0.4930 682.2 6.241 111.68703 52.3 7 1 0.000228 1.34 22.0 +0.01-0.55 0.00112 0.5474 17.8 0.111 0.00288 542.02 Kepler-180 b 13.817124 1.50 91.8 0.18 0.01294 2.2095 200.6 3.740 68.04028 21.9 7 1 0.000155 0.67 97.3 +0.28-0.18 0.00056 0.6139 13.4 0.170 0.00709

– 76 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

543.01 Kepler-181 c 4.302149 1.99 169.1 0.05 0.02435 5.1300 735.9 1.965 106.43717 67.8 7 1 0.000008 0.98 198.7 +0.41-0.05 0.00060 0.9814 14.9 0.035 0.00102 543.02 Kepler-181 b 3.137873 1.27 253.8 0.16 0.01549 3.9802 294.1 1.888 66.55562 34.4 7 1 0.000013 0.62 298.1 +0.30-0.16 0.00058 0.9534 13.6 0.075 0.00240 546.01 Kepler-182 c 20.684342 3.43 72.8 0.29 0.02739 0.6328 875.8 6.416 103.18819 63.1 7 1 0.000097 1.53 76.6 +0.15-0.29 0.00053 0.1290 19.1 0.086 0.00232 546.02 Kepler-182 b 9.825792 2.58 194.6 0.68 0.02065 0.3018 453.8 4.961 64.42414 40.6 7 1 0.000062 1.18 204.8 +0.04-0.47 0.00208 0.1872 15.7 0.109 0.00380 549.01 10.297707 4.61 134.0 0.93 0.03938 0.0100 512.6 10.057 64.72964 43.2 0 0 0.000082 4.29 136.6 +0.06-0.03 0.03257 0.0027 18.2 1.293 0.00508 549.02 0.635584 25.46 5374.5 1.20 0.21733 0.0863 380.8 4.796 66.41907 127.3 0 0 0.000002 13.83 5479.0 +0.11-0.11 0.07328 0.0138 7.3 0.136 0.00156 551.01 Kepler-183 c 11.637071 2.27 93.1 0.01 0.02174 2.9441 574.8 3.289 111.84301 37.9 7 1 0.000055 0.98 96.0 +0.39-0.01 0.00056 0.5080 20.6 0.084 0.00236 551.02 Kepler-183 b 5.687945 2.06 241.0 0.25 0.01973 4.2819 459.9 2.214 66.95634 37.2 7 1 0.000020 0.89 248.7 +0.21-0.25 0.00059 1.0852 17.6 0.068 0.00211 555.01 3.701766 1.56 315.1 0.12 0.01502 2.0246 275.8 2.511 105.44660 38.3 7 1 0.000017 0.11 57.1 +0.33-0.12 0.00050 0.4640 11.4 0.091 0.00250 555.02 86.494202 4.00 4.6 0.95 0.03865 0.0750 1055.9 8.916 114.89329 51.0 7 1 0.000950 0.52 0.9 +0.02-0.37 0.00441 0.5362 37.3 0.684 0.00664 564.01 21.057504 4.03 43.5 0.99 0.03933 0.0049 574.1 10.282 104.86259 31.2 7 1 0.000409 2.56 52.2 +0.08-0.03 0.01477 0.0059 35.7 1.111 0.00725 564.02 127.903063 6.07 3.9 0.54 0.05924 0.2767 3937.7 14.385 179.46326 210.6 7 0 0.000496 3.11 4.7 +0.11-0.14 0.00104 0.0741 30.2 0.169 0.00216 564.03 6.217187 1.21 220.7 0.03 0.01184 1.2670 165.9 3.501 64.71736 21.0 7 1 0.000063 0.62 265.4 +0.42-0.03 0.00057 0.3441 13.1 0.170 0.00625 567.01 Kepler-184 b 10.687576 2.36 90.4 0.20 0.02475 2.7363 732.7 3.221 102.93154 80.6 7 1 0.000025 1.33 118.8 +0.23-0.20 0.00047 0.5434 12.1 0.045 0.00120 567.02 Kepler-184 c 20.303005 1.97 38.5 0.04 0.02071 2.2116 517.7 4.348 109.80167 49.5 7 1 0.000087 1.11 50.5 +0.40-0.04 0.00048 0.3850 14.3 0.075 0.00234 567.03 Kepler-184 d 29.022358 2.49 23.9 0.89 0.02610 0.5145 580.4 3.961 131.36790 41.6 7 1 0.000176 1.41 31.3 +0.02-0.63 0.00187 2.0048 19.9 0.078 0.00309 569.01 Kepler-185 c 20.729042 2.02 22.1 0.57 0.02297 5.0235 593.9 2.781 118.43642 35.7 7 1 0.000097 1.17 30.0 +0.30-0.37 0.00236 3.6133 22.0 0.089 0.00293

– 77 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

569.02 Kepler-185 b 1.632900 1.17 632.7 0.34 0.01328 3.1975 210.0 1.559 67.54797 35.3 7 1 0.000005 0.67 857.6 +0.11-0.34 0.00044 0.8936 9.4 0.067 0.00189 571.01 Kepler-186 c 7.267277 1.34 17.7 0.10 0.02346 5.2462 682.2 2.313 107.31461 54.4 7 1 0.000019 0.10 7.2 +0.35-0.10 0.00059 1.0342 16.4 0.050 0.00137 571.02 Kepler-186 d 13.343058 1.56 8.0 0.62 0.02723 2.8319 818.1 2.798 109.90116 54.2 7 1 0.000041 0.16 3.2 +0.23-0.40 0.00201 1.4355 20.2 0.059 0.00169 571.03 Kepler-186 b 3.886803 1.14 41.2 0.19 0.01992 4.7723 487.3 1.907 66.32842 50.7 7 1 0.000010 0.09 16.6 +0.26-0.19 0.00053 1.0249 13.4 0.047 0.00144 571.04 Kepler-186 e 22.407793 1.33 4.0 0.19 0.02328 5.0067 669.3 3.370 86.79751 40.9 7 1 0.000123 0.10 1.6 +0.23-0.19 0.00068 1.0167 23.6 0.081 0.00291 572.01 Kepler-187 c 10.640263 2.67 210.1 0.09 0.01897 0.6378 429.5 5.284 112.77393 61.2 7 1 0.000048 0.52 99.2 +0.35-0.09 0.00042 0.1148 10.9 0.081 0.00237 572.02 Kepler-187 b 4.938864 1.41 591.6 0.15 0.01002 0.5338 118.4 4.279 68.95186 21.8 7 1 0.000058 0.28 279.5 +0.28-0.15 0.00043 0.1322 8.4 0.193 0.00746 573.01 Kepler-188 c 5.996553 3.19 351.5 0.66 0.02561 0.7281 701.2 3.231 105.50314 70.6 7 1 0.000015 1.45 375.1 +0.17-0.45 0.00167 0.3958 13.5 0.050 0.00146 573.02 Kepler-188 b 2.061897 1.68 1495.4 0.18 0.01346 3.0225 214.5 1.791 66.19858 29.7 7 1 0.000010 0.76 1595.5 +0.25-0.18 0.00046 0.6804 11.1 0.076 0.00270 574.01 Kepler-189 c 20.134866 2.38 20.1 0.13 0.02907 3.9897 1049.6 3.565 104.36552 69.4 7 1 0.000057 1.19 24.2 +0.30-0.13 0.00063 0.7019 21.5 0.060 0.00159 574.02 Kepler-189 b 10.399931 1.21 48.8 0.23 0.01476 2.1209 269.0 3.417 74.51092 24.4 7 1 0.000085 0.61 58.8 +0.22-0.23 0.00059 0.5461 15.4 0.118 0.00438 579.01 Kepler-190 b 2.019999 1.56 427.2 0.68 0.01796 1.2391 340.3 1.821 103.06945 71.3 7 1 0.000003 0.11 86.4 +0.05-0.48 0.00071 0.7909 6.9 0.031 0.00089 579.02 Kepler-190 c 3.763024 1.46 189.9 0.16 0.01678 8.8572 345.4 1.536 65.59486 50.8 7 1 0.000009 0.10 38.4 +0.29-0.16 0.00050 1.9505 10.3 0.043 0.00141 582.01 5.945030 2.17 112.8 0.12 0.02515 3.0809 784.5 2.583 103.47205 84.5 2 1 0.000010 1.07 133.8 +0.29-0.12 0.00049 0.4702 12.7 0.034 0.00097 582.02 Kepler-191 c 17.738506 1.86 26.5 0.14 0.02157 6.9076 576.0 2.821 81.98862 36.5 7 1 0.000082 0.92 31.4 +0.30-0.14 0.00065 1.5805 21.5 0.083 0.00284 582.03 Kepler-191 b 9.939632 1.34 57.3 0.14 0.01560 3.4435 299.7 2.917 64.58517 26.4 7 1 0.000066 0.66 67.9 +0.31-0.14 0.00063 0.8237 15.3 0.106 0.00408 584.01 Kepler-192 b 9.926746 2.74 101.0 0.38 0.02495 1.3402 738.8 3.780 108.68501 97.2 7 1 0.000018 0.45 40.5 +0.08-0.38 0.00052 0.2915 9.9 0.055 0.00102

– 78 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

584.02 Kepler-192 c 21.223400 2.79 36.3 0.82 0.02536 0.3451 606.8 4.940 103.37460 71.1 7 1 0.000076 0.52 14.6 +0.05-0.56 0.00239 0.5749 12.5 0.108 0.00218 590.01 Kepler-193 b 11.388480 2.39 168.8 0.12 0.01911 2.1031 431.1 3.618 107.55117 38.9 7 1 0.000054 1.08 178.1 +0.34-0.12 0.00055 0.4629 15.3 0.089 0.00257 590.02 Kepler-193 c 50.697494 2.75 23.2 0.06 0.02194 1.9844 568.4 6.115 74.32288 35.1 7 1 0.000446 1.24 24.4 +0.38-0.06 0.00062 0.4137 22.2 0.156 0.00400 593.01 9.997616 2.48 135.5 0.33 0.02245 2.2718 587.5 3.233 104.78670 48.3 2 1 0.000034 1.02 132.8 +0.18-0.33 0.00060 0.6686 16.1 0.063 0.00187 593.02 90.411783 3.65 7.2 0.65 0.03308 1.3406 1172.9 6.622 141.50145 45.6 2 1 0.000622 1.51 7.1 +0.16-0.43 0.00222 0.7512 32.6 0.130 0.00399 593.03 25.533358 1.96 39.1 0.56 0.01779 1.7850 353.2 4.210 80.61493 29.1 2 1 0.000284 0.81 38.3 +0.05-0.44 0.00073 0.7931 22.3 0.165 0.00549 597.01 Kepler-194 c 17.308032 2.59 75.3 0.08 0.02312 1.2680 638.9 4.961 109.94169 46.9 7 1 0.000079 1.36 92.0 +0.33-0.08 0.00049 0.2094 16.6 0.088 0.00253 597.02 Kepler-194 b 2.092281 1.51 1262.2 0.13 0.01350 1.3942 221.4 2.351 66.05964 32.2 7 1 0.000008 0.79 1542.8 +0.36-0.13 0.00043 0.3338 9.4 0.081 0.00232 597.03 Kepler-194 d 52.814973 2.40 17.1 0.18 0.02144 1.1667 547.6 7.300 97.90324 27.4 7 1 0.000481 1.26 20.9 +0.23-0.18 0.00061 0.2149 23.9 0.151 0.00559 598.01 Kepler-195 b 8.307872 2.03 73.1 0.05 0.02404 2.4038 716.4 3.150 104.17120 68.1 7 1 0.000020 0.74 66.5 +0.35-0.05 0.00047 0.3765 13.3 0.042 0.00133 598.02 Kepler-195 c 34.096863 1.55 11.2 0.29 0.01834 4.4883 408.9 3.904 86.81712 19.4 7 1 0.000371 0.57 10.2 +0.17-0.29 0.00078 1.2512 23.5 0.162 0.00551 601.01 5.404268 2.70 309.0 0.26 0.02543 2.9764 762.9 2.462 105.18454 83.4 7 1 0.000008 1.27 341.8 +0.14-0.26 0.00039 0.4945 11.3 0.032 0.00089 601.02 11.678904 24.43 112.0 1.19 0.23025 0.9610 1268.2 1.500 64.51180 76.5 7 2 0.000016 18.62 123.8 +0.10-0.26 0.13810 0.3123 31.9 0.048 0.00085 601.03 1.208436 1.50 2245.2 0.08 0.01411 3.0895 234.9 1.511 66.67393 46.3 7 1 0.000003 0.71 2483.4 +0.40-0.08 0.00039 0.6575 7.5 0.044 0.00138 612.01 Kepler-196 b 20.739886 1.90 19.9 0.29 0.02228 5.9929 604.5 3.014 106.21817 48.9 7 1 0.000066 0.15 4.4 +0.17-0.29 0.00060 1.4535 16.7 0.070 0.00190 612.02 Kepler-196 c 47.427737 2.24 6.6 0.09 0.02628 3.1989 854.8 5.114 149.55425 56.2 7 1 0.000223 0.17 1.5 +0.32-0.09 0.00060 0.5132 19.5 0.080 0.00223 620.01 Kepler-51 b 45.155482 7.64 17.7 0.27 0.07124 2.1647 5976.7 5.804 92.10462 181.8 7 2 0.000048 3.64 19.9 +0.15-0.17 0.00055 0.2239 32.3 0.042 0.00061

– 79 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

620.02 Kepler-51 d 130.179811 10.42 4.3 0.31 0.09719 2.0693 11081.7 8.520 145.02776 412.4 7 2 0.000142 4.97 4.8 +0.05-0.19 0.00057 0.1766 43.5 0.052 0.00059 620.03 Kepler-51 c 85.314714 5.48 7.6 0.96 0.05113 2.3533 1681.8 2.856 228.31725 38.6 7 2 0.000491 7.98 8.6 +0.02-0.21 0.07037 6.8962 111.5 0.305 0.00262 623.01 Kepler-197 c 10.349695 1.23 180.1 0.22 0.01008 1.0871 118.5 4.251 107.06421 45.7 5 1 0.000045 0.04 22.9 +0.20-0.22 0.00021 0.2150 2.9 0.070 0.00254 623.02 Kepler-197 d 15.677563 1.22 103.0 0.66 0.00995 0.3922 105.9 5.326 112.46886 39.2 5 1 0.000096 0.10 13.1 +0.25-0.43 0.00073 0.2215 3.1 0.096 0.00328 623.03 Kepler-197 b 5.599308 1.02 405.2 0.22 0.00836 0.9053 81.2 3.681 104.47282 46.9 5 1 0.000023 0.04 51.5 +0.21-0.22 0.00020 0.1726 2.3 0.069 0.00221 623.04 Kepler-197 e 25.209715 0.91 54.2 0.14 0.00746 0.8452 65.2 6.298 87.41342 37.2 5 1 0.000387 0.04 6.9 +0.31-0.14 0.00028 0.2136 3.7 0.205 0.00934 624.01 Kepler-198 b 17.790037 2.82 44.5 0.03 0.02751 1.8113 914.2 4.478 115.43638 97.1 7 1 0.000035 0.42 16.4 +0.35-0.03 0.00041 0.2285 11.0 0.039 0.00105 624.02 Kepler-198 c 49.567416 2.47 11.4 0.40 0.02409 7.0817 677.7 3.668 102.54001 48.2 7 1 0.000220 0.37 4.2 +0.05-0.40 0.00058 1.7488 18.8 0.079 0.00247 638.01 Kepler-199 b 23.637604^{tt} 3.11 34.0 0.15 0.02947 1.7352 1033.1 4.954 105.64846 91.3 7 1 0.000050 0.56 15.1 +0.25-0.15 0.00044 0.2408 12.0 0.043 0.00110 638.02 Kepler-199 c 67.093408^{tt} 3.25 8.5 0.13 0.03080 1.8149 1131.1 6.931 79.56577 82.4 7 1 0.000190 0.58 3.8 +0.27-0.13 0.00047 0.2670 15.9 0.061 0.00167 645.01 8.503434 1.63 226.7 0.46 0.01289 2.3846 187.8 2.804 103.86598 29.4 7 1 0.000045 0.32 108.3 +0.02-0.45 0.00043 0.8311 8.8 0.099 0.00290 645.02 23.782979 1.86 56.7 0.38 0.01465 0.3731 246.4 7.651 112.75249 37.0 2 1 0.000254 0.36 27.0 +0.08-0.38 0.00040 0.0911 8.2 0.136 0.00691 654.01 Kepler-200 b 8.594805 2.13 129.5 0.93 0.02067 0.1262 339.2 3.534 104.62998 43.2 7 1 0.000036 0.41 52.8 +0.00-0.66 0.00192 0.9023 10.3 0.107 0.00234 654.02 Kepler-200 c 10.222157 1.59 102.3 0.74 0.01547 20.9701 241.3 1.110 68.89056 19.0 7 1 0.000053 0.29 41.8 +0.13-0.05 0.00117 5.9822 22.2 0.123 0.00297 655.01 Kepler-201 b 25.672083 2.46 59.7 0.38 0.01833 1.0252 385.9 5.627 125.09705 83.9 7 1 0.000075 0.48 28.1 +0.05-0.38 0.00030 0.2520 6.6 0.063 0.00169 655.02 Kepler-201 c 151.884058 2.85 5.6 0.92 0.02127 0.0506 375.5 12.990 109.41816 53.0 7 1 0.002014 0.60 2.6 +0.02-0.62 0.00164 0.2996 10.1 0.428 0.00794 657.01 Kepler-202 b 4.069427 1.63 93.4 0.64 0.02240 2.0120 549.3 2.067 104.01577 70.4 7 1 0.000007 0.10 17.6 +0.04-0.47 0.00084 1.0071 10.9 0.036 0.00098

– 80 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

657.02 Kepler-202 c 16.282493 1.85 14.8 0.31 0.02534 5.5351 796.6 2.853 113.79623 65.5 7 1 0.000038 0.10 2.8 +0.10-0.31 0.00061 1.0566 16.6 0.050 0.00140 658.01 Kepler-203 b 3.162697 2.57 689.7 0.52 0.02111 2.6550 500.6 1.900 102.64158 95.5 7 1 0.000004 0.52 313.4 +0.07-0.42 0.00150 0.8506 7.6 0.028 0.00073 658.02 Kepler-203 c 5.370647 2.47 342.7 0.10 0.02034 5.8187 492.4 2.014 105.23697 78.1 7 1 0.000008 0.47 155.7 +0.34-0.10 0.00038 1.0268 9.1 0.033 0.00091 658.03 Kepler-203 d 11.329720 1.44 127.5 0.34 0.01181 1.2972 163.4 3.992 66.96882 25.0 7 1 0.000080 0.28 58.0 +0.12-0.34 0.00044 0.3601 9.0 0.131 0.00445 661.01 Kepler-204 b 14.400974 2.53 114.3 0.57 0.01875 1.2399 391.2 3.906 107.98593 47.0 7 1 0.000056 0.54 56.8 +0.01-0.50 0.00050 0.5990 10.8 0.080 0.00213 661.02 Kepler-204 c 25.660593 1.79 52.3 0.62 0.01327 1.3307 191.8 4.383 88.15165 19.2 7 1 0.000288 0.39 26.0 +0.01-0.48 0.00057 0.6710 13.0 0.185 0.00679 663.01 Kepler-205 b 2.755640 1.51 90.8 0.87 0.02539 0.5098 535.6 1.948 103.84454 117.4 7 1 0.000002 0.14 15.8 +0.01-0.59 0.00213 1.2663 6.3 0.036 0.00046 663.02 Kepler-205 c 20.306546 1.64 6.2 0.81 0.02755 1.8548 705.6 2.873 105.65620 73.2 7 1 0.000038 0.12 1.1 +0.00-0.43 0.00174 2.1561 12.0 0.067 0.00113 664.01 Kepler-206 c 13.137471 1.77 112.6 0.35 0.01372 0.8772 219.9 4.768 103.22781 47.7 7 1 0.000065 0.34 51.5 +0.09-0.35 0.00032 0.2131 6.2 0.082 0.00307 664.02 Kepler-206 b 7.781987 1.20 228.0 0.33 0.00930 1.1846 100.8 3.644 66.58990 26.9 7 1 0.000058 0.24 104.3 +0.14-0.33 0.00035 0.3193 5.6 0.128 0.00413 664.03 Kepler-206 d 23.442810 1.19 52.2 0.10 0.00922 1.2788 100.0 5.389 85.01049 16.5 7 1 0.000453 0.24 23.9 +0.37-0.10 0.00048 0.3844 8.1 0.347 0.01179 665.01 Kepler-207 d 5.868075 3.31 599.5 0.27 0.01912 0.7540 430.3 3.970 103.32243 85.8 7 1 0.000009 0.63 277.2 +0.11-0.27 0.00023 0.1037 4.5 0.031 0.00091 665.02 Kepler-207 b 1.611865 1.57 3296.1 0.38 0.00905 0.4307 95.1 2.999 66.57041 34.5 7 1 0.000006 0.30 1524.3 +0.08-0.38 0.00023 0.1051 2.9 0.065 0.00226 665.03 Kepler-207 c 3.071571 1.50 1431.8 0.18 0.00867 0.3802 88.7 4.077 66.30425 25.1 7 1 0.000016 0.29 662.2 +0.27-0.18 0.00024 0.0789 3.2 0.085 0.00295 671.01 Kepler-208 b 4.228640 1.63 729.9 0.16 0.01136 0.9860 156.1 3.308 103.74197 49.4 7 1 0.000018 0.30 320.0 +0.27-0.16 0.00030 0.1861 4.7 0.067 0.00213 671.02 Kepler-208 c 7.466623 1.39 341.0 0.27 0.00967 0.9972 112.0 3.882 65.77383 28.0 7 1 0.000067 0.26 149.5 +0.18-0.27 0.00035 0.2384 5.6 0.132 0.00486 671.03 Kepler-208 e 16.259458 1.48 122.1 0.21 0.01031 2.0108 127.6 4.038 45.01425 21.1 7 1 0.000176 0.28 53.5 +0.23-0.21 0.00043 0.5522 8.3 0.176 0.00605

– 81 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

671.04 Kepler-208 d 11.131786 1.20 200.6 0.11 0.00836 1.3546 85.5 4.118 56.29541 18.5 7 1 0.000131 0.23 88.0 +0.34-0.11 0.00042 0.3731 6.8 0.209 0.00740 672.01 Kepler-209 b 16.087845 2.26 48.6 0.08 0.02213 6.0222 590.4 2.878 105.81339 65.7 7 1 0.000041 0.34 18.0 +0.36-0.08 0.00047 1.2008 11.5 0.055 0.00137 672.02 Kepler-209 c 41.749882 3.10 13.5 0.58 0.03041 1.2275 1030.1 5.630 86.83986 106.9 7 1 0.000106 0.51 5.1 +0.04-0.48 0.00218 0.4997 13.5 0.080 0.00145 676.01 Kepler-210 c 7.972513 3.62 33.3 0.40 0.05105 2.5228 3197.6 2.902 104.58436 326.4 7 1 0.000003 0.19 6.3 +0.05-0.34 0.00083 0.4521 9.7 0.021 0.00020 676.02 Kepler-210 b 2.453234 2.94 159.5 0.73 0.04138 1.6314 1730.3 1.746 103.89153 352.2 7 1 0.000001 0.21 30.3 +0.04-0.50 0.00201 1.1812 8.1 0.016 0.00018 678.01 Kepler-211 c 6.040450 1.29 106.8 0.04 0.01444 6.1387 259.7 2.053 105.59435 51.3 7 1 0.000016 0.09 22.5 +0.43-0.04 0.00042 1.2599 7.0 0.049 0.00128 678.02 Kepler-211 b 4.138575 1.26 178.2 0.02 0.01414 3.3085 249.5 2.226 65.01632 65.2 7 1 0.000010 0.09 37.6 +0.38-0.02 0.00031 0.5447 5.6 0.044 0.00138 679.01 Kepler-212 c 31.805174 2.74 51.9 0.15 0.01724 0.4746 362.8 8.316 123.24830 82.6 7 1 0.000142 0.51 23.1 +0.24-0.15 0.00031 0.0800 6.3 0.091 0.00278 679.02 Kepler-212 b 16.257582 1.09 125.6 0.19 0.00687 0.4624 59.2 6.596 72.64774 16.4 7 1 0.000378 0.21 56.0 +0.25-0.19 0.00039 0.1229 5.1 0.337 0.01064 691.01 29.666253 2.93 41.3 0.02 0.02373 0.4505 666.7 8.415 122.36998 95.5 7 1 0.000098 0.57 22.4 +0.35-0.02 0.00032 0.0667 9.6 0.066 0.00183 691.02 16.226134 1.28 92.4 0.62 0.01036 0.2627 117.6 6.439 77.00589 19.9 2 1 0.000432 0.25 50.3 +0.31-0.40 0.00044 0.2468 8.7 0.316 0.01590 692.01 Kepler-213 b 2.462360 1.62 1038.1 0.22 0.01240 3.6470 182.5 1.768 104.83986 45.9 7 1 0.000006 0.31 463.6 +0.23-0.22 0.00032 0.8564 5.8 0.048 0.00142 692.02 Kepler-213 c 4.822962 2.34 414.1 0.75 0.01791 22.9660 311.0 0.828 67.43649 41.5 7 1 0.000008 0.45 184.9 +0.10-0.02 0.00086 5.8600 12.4 0.041 0.00097 693.01 Kepler-214 c 28.779800 2.13 63.0 0.28 0.01441 0.4735 243.8 7.803 126.30447 39.3 7 1 0.000397 0.40 27.8 +0.19-0.28 0.00044 0.1159 9.8 0.212 0.00645 693.02 Kepler-214 b 15.660544 2.61 140.2 0.03 0.01765 0.4050 368.8 7.006 79.34895 65.3 7 1 0.000080 0.49 61.8 +0.38-0.03 0.00035 0.0624 8.3 0.092 0.00277 700.01 Kepler-215 d 30.864423 2.39 29.9 0.15 0.02130 13.3789 538.7 2.719 105.93309 54.8 7 1 0.000092 0.55 17.4 +0.30-0.15 0.00048 2.5861 14.7 0.059 0.00154 700.02 Kepler-215 b 9.360672 1.62 145.1 0.58 0.01441 1.6334 229.7 3.035 104.96719 45.2 7 1 0.000040 0.40 84.5 +0.07-0.43 0.00131 0.6479 7.6 0.071 0.00250

– 82 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

700.03 Kepler-215 c 14.667108 1.77 80.2 0.85 0.01579 0.3652 229.6 3.855 78.42381 34.0 7 1 0.000089 0.42 46.7 +0.05-0.57 0.00101 0.9341 8.2 0.092 0.00314 700.04 Kepler-215 e 68.161010 1.75 10.4 0.28 0.01559 2.9632 285.7 5.654 120.03247 26.9 7 1 0.000630 0.41 6.1 +0.17-0.28 0.00054 0.7279 14.5 0.151 0.00569 701.01 Kepler-62 d 18.164049 1.90 14.8 0.07 0.02731 6.6129 941.4 2.921 113.81203 102.9 7 1 0.000029 0.07 1.8 +0.36-0.07 0.00056 1.0984 13.7 0.038 0.00089 701.02 Kepler-62 b 5.714930 1.29 70.4 0.11 0.01851 4.0216 431.3 2.319 103.91962 80.8 7 1 0.000011 0.05 8.2 +0.33-0.11 0.00055 0.8090 7.7 0.034 0.00109 701.03 Kepler-62 e 122.387697 1.16 1.2 0.34 0.01670 1.6749 356.5 8.158 47.22751 47.8 7 1 0.073339 0.12 0.2 +0.16-0.34 0.00167 1.3702 58.5 1.453 0.49980 701.04 Kepler-62 f 267.289949 1.37 0.4 0.49 0.01980 3.1268 459.4 8.021 522.71442 21.1 7 1 0.007210 0.07 0.1 +0.01-0.44 0.00086 1.1096 29.5 0.305 0.00923 701.05 Kepler-62 c 12.441921 0.58 24.6 0.28 0.00840 2.3140 86.5 3.452 67.64207 11.9 7 1 0.000203 0.04 2.9 +0.19-0.28 0.00055 0.9187 8.9 0.279 0.01050 707.01 Kepler-33 d 21.775763 5.13 133.5 0.29 0.02588 0.3547 781.0 7.899 122.63699 111.9 7 1 0.000059 0.51 33.3 +0.24-0.20 0.00037 0.0725 9.0 0.067 0.00152 707.02 Kepler-33 f 41.027949 5.26 57.4 0.91 0.02653 0.0281 585.9 10.804 105.58250 74.7 7 1 0.000286 0.54 14.3 +0.02-0.03 0.00073 0.0123 11.5 0.289 0.00444 707.03 Kepler-33 e 31.784915 4.43 81.4 0.87 0.02234 0.0528 449.2 9.245 68.86536 57.7 7 1 0.000221 0.51 20.3 +0.03-0.61 0.00131 0.1527 10.6 0.170 0.00415 707.04 Kepler-33 c 13.175615 3.33 262.3 0.76 0.01677 0.1135 284.9 6.769 76.67569 48.3 7 1 0.000086 0.35 65.5 +0.07-0.52 0.00069 0.1404 7.6 0.107 0.00385 707.05 Kepler-33 b 5.668083 1.65 799.7 0.23 0.00830 0.4108 80.5 4.809 64.88832 19.6 7 1 0.000073 0.18 199.6 +0.21-0.23 0.00039 0.1049 6.0 0.172 0.00655 708.01 Kepler-216 c 17.406669 3.04 105.7 0.09 0.02207 0.4786 576.5 6.869 104.00607 90.6 7 1 0.000057 0.59 49.5 +0.24-0.09 0.00026 0.0625 8.3 0.056 0.00172 708.02 Kepler-216 b 7.693641 2.35 313.4 0.72 0.01709 0.1932 302.2 5.050 109.50106 63.3 7 1 0.000031 0.46 146.8 +0.01-0.56 0.00065 0.1633 7.2 0.079 0.00237 710.01 Kepler-217 b 5.374943 2.23 994.2 0.02 0.01135 0.7298 157.4 4.011 103.93324 53.6 7 1 0.000019 0.32 355.2 +0.45-0.02 0.00028 0.1405 4.0 0.061 0.00200 710.02 Kepler-217 c 8.586004 1.85 530.3 0.37 0.00943 1.5888 105.0 3.356 70.96096 25.8 7 1 0.000053 0.27 189.4 +0.09-0.37 0.00036 0.4435 5.6 0.127 0.00374 710.03 3.886869 1.40 1553.4 0.08 0.00715 0.6546 62.3 3.711 65.49368 21.2 2 1 0.000033 0.21 555.0 +0.39-0.08 0.00030 0.1609 3.7 0.153 0.00533

– 83 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

711.01 Kepler-218 c 44.699576 3.14 15.1 0.52 0.02705 1.0584 836.0 6.271 107.82235 73.2 7 1 0.000167 0.26 3.2 +0.07-0.42 0.00068 0.3382 14.5 0.075 0.00218 711.02 Kepler-218 b 3.619337 1.48 438.0 0.09 0.01278 1.1529 199.2 3.014 68.43801 49.9 7 1 0.000011 0.12 92.2 +0.35-0.09 0.00034 0.2233 6.1 0.055 0.00183 711.03 124.523175 4.13 3.8 0.94 0.03558 0.0537 924.3 11.420 187.18423 58.7 2 1 0.001029 0.58 0.8 +0.01-0.64 0.00411 0.4429 18.3 0.521 0.00374 717.01 14.707497 2.18 111.2 0.26 0.01491 3.6721 265.0 3.173 108.79248 37.8 7 1 0.000053 0.38 46.0 +0.20-0.26 0.00042 0.8429 9.0 0.068 0.00193 717.02 3.601458 1.04 718.2 0.21 0.00714 13.4541 60.0 1.293 66.11900 15.3 2 1 0.000033 0.20 297.4 +0.29-0.21 0.00061 6.5629 8.7 0.180 0.00559 718.01 Kepler-219 b 4.585512 2.95 686.3 0.03 0.01813 1.1693 392.6 3.272 102.85680 94.8 7 1 0.000008 0.49 278.4 +0.39-0.03 0.00028 0.1861 5.7 0.033 0.00100 718.02 Kepler-219 c 22.714613 3.58 81.9 0.01 0.02199 1.0444 578.1 5.808 80.29108 85.2 7 1 0.000075 0.60 33.2 +0.41-0.01 0.00037 0.1634 9.1 0.063 0.00208 718.03 Kepler-219 d 47.903645 2.81 30.1 0.06 0.01726 2.2609 355.8 5.719 74.98257 40.7 7 1 0.000307 0.48 12.2 +0.40-0.06 0.00047 0.4965 12.4 0.127 0.00387 719.01 Kepler-220 c 9.034199 1.57 31.6 0.06 0.02156 24.6210 559.7 1.486 104.01425 106.8 7 1 0.000009 0.09 6.0 +0.45-0.02 0.00043 3.6117 7.7 0.019 0.00053 719.02 Kepler-220 d 28.122397 0.98 6.9 0.14 0.01341 3.4697 217.6 4.103 79.91883 37.2 7 1 0.000162 0.06 1.3 +0.29-0.14 0.00038 0.7085 7.3 0.095 0.00366 719.03 Kepler-220 e 45.902733 1.33 3.6 0.53 0.01836 1.9475 382.8 5.088 99.56251 59.0 7 1 0.000192 0.12 0.6 +0.02-0.45 0.00136 0.6177 8.7 0.077 0.00248 719.04 Kepler-220 b 4.159807 0.81 86.4 0.09 0.01111 8.3460 146.7 1.626 66.78646 44.7 7 1 0.000010 0.05 16.3 +0.36-0.09 0.00032 1.9867 4.4 0.046 0.00145 720.01 Kepler-221 c 5.690586 2.93 131.0 0.04 0.03268 3.2940 1325.9 2.522 107.04865 167.1 7 1 0.000004 0.27 34.0 +0.28-0.04 0.00030 0.2810 9.2 0.014 0.00037 720.02 Kepler-221 d 10.041560 2.73 60.2 0.36 0.03043 4.7271 1111.6 2.530 70.08456 126.9 7 1 0.000011 0.25 15.7 +0.03-0.36 0.00045 0.7600 11.1 0.024 0.00060 720.03 Kepler-221 e 18.369917 2.63 27.0 0.26 0.02939 13.5564 1054.3 2.245 64.86048 89.2 7 1 0.000029 0.25 7.0 +0.17-0.26 0.00060 2.5574 16.0 0.038 0.00087 720.04 Kepler-221 b 2.795906 1.71 333.0 0.61 0.01904 1.4756 399.8 2.064 65.72929 84.3 7 1 0.000004 0.17 86.6 +0.00-0.49 0.00060 0.6445 6.8 0.029 0.00084 723.01 Kepler-222 b 3.936981 3.16 255.6 0.57 0.03328 3.4716 1238.1 1.828 102.65076 106.2 7 1 0.000005 1.40 270.2 +0.02-0.43 0.00233 1.2205 15.9 0.026 0.00063

– 84 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

723.02 Kepler-222 d 28.081912 3.69 18.2 0.44 0.03888 2.1060 1782.2 4.541 127.91404 86.0 7 1 0.000069 1.63 19.2 +0.03-0.38 0.00210 0.4421 24.6 0.051 0.00129 723.03 Kepler-222 c 10.088810 4.64 71.1 0.90 0.04896 2.7303 1943.5 1.714 106.08263 111.7 7 1 0.000011 2.07 75.2 +0.02-0.42 0.00413 8.3030 29.6 0.087 0.00061 730.01 Kepler-223 d 14.788759 2.98 79.4 0.60 0.02681 0.3409 792.5 5.967 109.76379 40.7 7 1 0.000108 1.31 81.8 +0.00-0.49 0.00215 0.2592 26.9 0.145 0.00376 730.02 Kepler-223 c 9.848183 2.00 138.0 0.57 0.01803 0.2510 361.9 5.832 71.38748 23.5 7 1 0.000145 0.87 142.2 +0.03-0.48 0.00085 0.1933 27.6 0.449 0.01037 730.03 Kepler-223 e 19.721734 2.40 54.5 0.18 0.02163 0.8585 560.9 5.820 68.10369 24.1 7 1 0.000228 1.04 56.2 +0.26-0.18 0.00085 0.1940 31.2 0.199 0.00593 730.04 Kepler-223 b 7.384108 1.69 200.5 0.06 0.01522 0.4098 278.7 5.416 70.48632 20.2 4 1 0.000159 0.73 206.7 +0.38-0.06 0.00071 0.1098 20.8 0.298 0.01126 732.01 1.260254 3.57 1466.2 0.80 0.03427 0.5248 1121.2 1.844 103.40874 150.6 7 1 0.000001 1.52 1500.8 +0.01-0.56 0.00157 0.6845 11.7 0.020 0.00047 732.02 3.295305 1.30 400.6 0.72 0.01245 2.1855 157.5 1.659 65.49571 13.4 2 1 0.000033 0.56 410.1 +0.00-0.53 0.00086 3.0461 20.4 0.206 0.00624 732.03 5.254484 1.27 215.4 0.37 0.01223 1.6046 176.3 2.855 65.55022 13.5 7 1 0.000080 0.54 220.6 +0.09-0.37 0.00071 0.6091 16.4 0.203 0.00898 733.01 Kepler-224 c 5.925003 3.12 77.1 0.85 0.04226 0.4736 1587.0 2.843 102.71508 88.6 7 1 0.000010 0.26 14.8 +0.00-0.60 0.00266 1.0302 24.2 0.045 0.00098 733.02 Kepler-224 d 11.349393 2.30 32.7 0.01 0.03119 3.4782 1208.9 3.114 67.31602 54.9 7 1 0.000034 0.14 6.3 +0.42-0.01 0.00076 0.6048 29.8 0.055 0.00182 733.03 Kepler-224 b 3.132924 1.39 179.6 0.32 0.01888 2.8519 429.3 2.034 68.67544 32.3 7 1 0.000014 0.09 34.6 +0.14-0.32 0.00069 0.8087 19.7 0.078 0.00250 733.04 Kepler-224 e 18.643577 1.97 16.9 0.62 0.02667 13.8035 780.1 1.846 74.62463 20.5 7 1 0.000087 0.15 3.2 +0.09-0.32 0.00136 5.4928 49.2 0.083 0.00283 734.01 24.543598 3.41 34.7 0.80 0.03393 0.1251 1120.4 7.755 120.91828 68.3 7 1 0.000123 1.33 32.4 +0.00-0.56 0.00160 0.1766 22.6 0.123 0.00277 734.02 70.279135 39.35 8.6 1.37 0.39136 0.2161 708.8 3.673 84.32747 14.3 7 2 0.000908 41.61 8.0 +0.19-0.51 0.38525 0.1718 74.9 0.430 0.00759 736.01 Kepler-225 c 18.794234 1.84 3.1 0.32 0.03513 4.2887 1548.5 3.279 110.79350 42.3 7 1 0.000076 0.10 0.8 +0.13-0.32 0.00112 0.9698 50.2 0.080 0.00216 736.02 Kepler-225 b 6.738975 1.20 12.1 0.45 0.02297 1.6158 636.8 3.018 68.27658 26.8 7 1 0.000041 0.07 3.0 +0.03-0.42 0.00088 0.5005 30.6 0.111 0.00360

– 85 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

738.01 Kepler-29 b 10.338566 3.78 109.1 0.94 0.03787 0.1141 1077.6 3.969 93.06721 50.4 7 1 0.000283 1.94 128.4 +0.00-0.63 0.00421 1.1372 240.9 0.733 0.02024 738.02 Kepler-29 c 13.288198 16.86 76.6 1.13 0.16895 0.0219 927.2 5.106 105.08199 36.0 7 2 0.000096 13.09 90.2 +0.07-0.18 0.10022 0.0067 41.2 0.230 0.00391 749.01 Kepler-226 c 5.349555 2.27 164.8 0.25 0.02592 1.5654 810.0 3.051 104.80599 64.5 7 1 0.000014 0.90 159.2 +0.14-0.25 0.00050 0.2657 17.4 0.049 0.00148 749.02 Kepler-226 b 3.940997 1.55 251.0 0.15 0.01766 1.9408 381.2 2.596 69.09337 30.9 7 1 0.000020 0.62 242.3 +0.28-0.15 0.00056 0.4559 17.3 0.091 0.00284 749.03 Kepler-226 d 8.109044 1.22 96.0 0.06 0.01396 1.4061 239.9 3.698 65.80333 15.0 7 1 0.000094 0.49 92.7 +0.39-0.06 0.00073 0.4304 20.2 0.232 0.00751 752.01 Kepler-227 b 9.488015 3.11 154.4 0.82 0.02607 0.6084 638.3 3.113 103.53899 37.6 7 1 0.000039 1.57 182.4 +0.08-0.60 0.00152 1.3011 21.9 0.074 0.00240 752.02 Kepler-227 c 54.418694 3.04 14.9 0.07 0.02553 5.3555 787.2 4.511 95.51038 28.7 7 1 0.000460 1.53 17.6 +0.36-0.07 0.00089 1.1398 40.0 0.141 0.00535 756.01 Kepler-228 d 11.094286 4.04 120.3 0.46 0.03651 0.7734 1523.4 4.591 104.20123 73.4 7 1 0.000036 1.85 130.3 +0.02-0.44 0.00075 0.2055 28.1 0.069 0.00184 756.02 Kepler-228 c 4.134444 2.70 453.8 0.15 0.02441 1.1979 706.1 3.123 105.97678 45.0 7 1 0.000018 1.24 491.8 +0.31-0.15 0.00065 0.2528 22.0 0.074 0.00230 756.03 Kepler-228 b 2.566546 1.53 849.8 0.45 0.01386 1.2968 219.4 2.327 112.55360 17.5 7 1 0.000026 0.71 920.8 +0.50-0.26 0.00076 0.4950 20.3 0.151 0.00540 757.01 Kepler-229 c 16.068638 4.92 23.8 0.00 0.06196 3.6425 4850.9 3.546 106.62165 163.6 7 2 0.000019 1.74 21.1 +0.34-0.00 0.00078 0.3937 41.5 0.031 0.00062 757.02 Kepler-229 d 41.194912 3.85 6.7 0.80 0.04840 0.8696 2232.9 5.020 98.02365 56.2 7 1 0.000248 1.38 6.0 +0.00-0.55 0.00296 1.1839 59.4 0.089 0.00316 757.03 Kepler-229 b 6.252972 2.20 84.8 0.11 0.02767 3.0559 964.0 2.640 104.29884 44.8 7 1 0.000021 0.78 75.3 +0.31-0.11 0.00080 0.5943 29.7 0.060 0.00180 759.01 Kepler-230 b 32.625555 4.26 16.0 0.91 0.04779 0.2016 1845.9 5.783 127.13742 76.3 7 1 0.000126 2.17 19.2 +0.01-0.02 0.00122 0.0556 34.0 0.164 0.00198 759.02 Kepler-230 c 91.773242 2.04 4.0 0.03 0.02286 3.7667 645.1 6.034 126.83073 18.1 7 1 0.001618 1.04 4.9 +0.43-0.03 0.00116 1.1245 49.7 0.420 0.00941 775.01 Kepler-52 c 16.384888 1.71 8.0 0.27 0.02810 4.7778 1000.2 3.047 105.72794 41.3 7 1 0.000080 0.08 1.4 +0.16-0.27 0.00090 1.0427 35.2 0.082 0.00283 775.02 Kepler-52 b 7.877407 2.34 21.0 0.86 0.03862 0.8817 1256.4 2.444 109.37608 61.8 7 1 0.000020 0.22 3.5 +0.01-0.59 0.00328 2.3510 31.4 0.046 0.00136

– 86 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

775.03 Kepler-52 d 36.445171 1.95 2.8 0.76 0.03217 1.4812 1029.6 4.153 84.60115 33.0 7 1 0.000253 0.21 0.5 +0.05-0.53 0.00333 1.7093 44.6 0.117 0.00388 780.01 2.337448 2.06 260.2 0.05 0.02723 2.7693 930.6 1.978 104.76103 88.9 7 1 0.000003 0.94 290.5 +0.42-0.05 0.00075 0.5352 16.0 0.032 0.00077 780.02 7.240660 2.15 57.6 0.96 0.02838 4.8952 494.3 0.870 70.75732 17.3 2 2 0.000031 23.01 64.3 +0.64-0.04 0.30352 1.9552 46.2 0.141 0.00239 784.01 Kepler-231 c 19.271566 1.93 3.3 0.87 0.03612 0.8584 1079.5 3.209 119.76907 40.3 7 1 0.000099 0.19 0.8 +0.00-0.60 0.00311 2.4865 39.8 0.089 0.00327 784.02 Kepler-231 b 10.065275 1.73 7.9 0.82 0.03242 6.9535 935.5 1.440 69.28185 33.5 7 1 0.000027 0.12 1.9 +0.05-0.05 0.00171 1.8162 35.5 0.063 0.00148 787.01 Kepler-232 b 4.431222 3.08 336.1 0.35 0.02915 1.0619 997.6 3.172 104.01551 73.4 7 1 0.000011 1.47 378.1 +0.10-0.35 0.00063 0.2536 19.2 0.053 0.00139 787.02 Kepler-232 c 11.379349 3.83 96.1 0.92 0.03627 0.6117 1058.8 2.612 66.85018 42.5 7 1 0.000044 1.86 108.1 +0.01-0.52 0.00354 2.6011 36.9 0.127 0.00219 790.01 Kepler-233 b 8.472382 2.43 71.6 0.08 0.02936 3.9365 1066.8 2.697 107.16212 51.6 7 1 0.000026 0.66 50.8 +0.34-0.08 0.00075 0.7608 29.1 0.056 0.00160 790.02 Kepler-233 c 60.418955 2.71 5.2 0.86 0.03278 0.5425 944.7 5.619 114.16152 23.2 7 1 0.000630 0.78 3.7 +0.04-0.60 0.00295 1.5106 52.2 0.152 0.00573 800.01 Kepler-234 b 2.711506 3.70 1039.8 0.85 0.03046 0.1568 861.9 3.175 103.03513 71.4 7 1 0.000006 1.66 1090.9 +0.00-0.58 0.00166 0.3321 17.6 0.049 0.00130 800.02 Kepler-234 c 7.212050 3.51 280.6 0.16 0.02890 0.9702 984.7 4.039 105.81664 57.1 7 1 0.000022 1.56 294.4 +0.24-0.16 0.00054 0.1580 22.9 0.066 0.00178 806.01 Kepler-30 d 143.210889^{tt} 8.99 2.2 0.43 0.09358 1.7460 10333.1 8.877 87.22092 97.1 7 2 0.000243 1.44 0.9 +0.10-0.22 0.00142 0.3277 74.3 0.097 0.00102 806.02 Kepler-30 c 60.321328^{tt} 12.30 6.8 0.24 0.12799 2.3284 20059.2 6.637 176.91077 546.2 7 2 0.000044 1.96 2.8 +0.07-0.13 0.00064 0.1191 60.7 0.032 0.00039 806.03 Kepler-30 b 29.158204^{tt} 2.61 18.0 0.10 0.02721 2.2060 916.8 4.920 83.71661 10.9 2 1 0.000419 0.43 7.2 +0.35-0.10 0.00119 0.5260 59.7 0.194 0.00495 812.01 Kepler-235 b 3.340222 2.23 65.8 0.37 0.03682 3.5826 1662.6 1.925 104.97787 76.7 7 1 0.000005 0.10 11.2 +0.18-0.27 0.00088 0.7195 31.0 0.031 0.00084 812.02 Kepler-235 d 20.060548 2.05 6.0 0.11 0.03391 5.0562 1481.9 3.312 80.46149 37.7 7 1 0.000099 0.10 1.1 +0.30-0.11 0.00106 0.9253 53.5 0.083 0.00276 812.03 Kepler-235 e 46.183669 2.22 2.0 0.68 0.03678 1.6776 1443.4 4.833 98.23932 28.8 7 1 0.000425 0.29 0.3 +0.22-0.46 0.00463 1.6596 68.1 0.144 0.00501

– 87 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

812.04 Kepler-235 c 7.824904 1.28 21.3 0.24 0.02109 5.9093 563.0 2.217 69.55567 18.4 7 1 0.000055 0.08 3.6 +0.23-0.24 0.00114 1.8665 42.5 0.142 0.00455 817.01 Kepler-236 c 23.968127 2.00 2.6 0.84 0.03595 0.6294 1178.4 4.166 119.21690 30.5 7 1 0.000174 0.17 0.6 +0.05-0.57 0.00269 1.4546 48.2 0.126 0.00362 817.02 Kepler-236 b 8.295611 1.57 10.9 0.67 0.02824 14.3990 840.2 1.328 68.79207 23.1 7 1 0.000032 0.12 2.5 +0.14-0.12 0.00184 5.8411 58.3 0.081 0.00230 825.01 Kepler-237 c 8.103636 2.08 52.1 0.14 0.02627 2.2992 875.1 3.150 109.94805 42.4 7 1 0.000032 1.10 66.6 +0.28-0.14 0.00081 0.4438 28.2 0.073 0.00237 825.02 Kepler-237 b 4.715106 1.41 105.1 0.19 0.01787 3.0650 404.4 2.351 67.95992 21.7 7 1 0.000030 0.75 134.2 +0.29-0.19 0.00100 0.9253 26.6 0.129 0.00396 829.01 Kepler-53 b 18.649113 2.81 57.5 0.03 0.02686 2.1235 866.2 4.311 107.77505 48.1 2 1 0.000087 1.37 65.6 +0.42-0.03 0.00062 0.4052 23.4 0.093 0.00241 829.02 Kepler-53 d 9.751962 2.12 136.0 0.81 0.02024 0.2664 400.8 4.190 71.78520 31.4 7 1 0.000077 1.05 155.3 +0.10-0.56 0.00188 0.5248 18.0 0.136 0.00430 829.03 Kepler-53 c 38.558585 3.73 21.9 0.92 0.03568 0.1798 1036.4 5.800 96.84167 45.4 7 1 0.000249 1.84 25.0 +0.03-0.57 0.00308 1.0281 31.3 0.370 0.00462 834.01 Kepler-238 e 23.653647 8.26 69.3 0.14 0.05288 0.4126 3368.9 8.190 104.37611 269.5 7 2 0.000033 1.53 30.6 +0.18-0.12 0.00040 0.0474 17.3 0.042 0.00073 834.02 Kepler-238 d 13.233549 3.07 151.4 0.43 0.01967 0.3021 449.3 6.642 73.32179 44.9 7 1 0.000081 0.57 66.9 +0.01-0.43 0.00046 0.0692 13.3 0.109 0.00365 834.03 Kepler-238 c 6.155557 2.39 420.5 0.06 0.01532 0.4803 282.9 4.837 67.82322 35.8 7 1 0.000050 0.45 185.8 +0.38-0.06 0.00048 0.1023 11.2 0.126 0.00446 834.04 Kepler-238 b 2.090876 1.73 1731.8 0.78 0.01108 0.1572 120.5 3.193 67.16470 19.2 7 1 0.000020 0.40 765.1 +0.01-0.57 0.00159 0.2621 8.4 0.159 0.00553 834.05 Kepler-238 f 50.444110 2.76 25.4 0.21 0.01766 0.9996 373.8 7.489 111.52699 21.3 7 1 0.001105 0.52 11.2 +0.23-0.21 0.00072 0.2616 24.4 0.308 0.01318 835.01 Kepler-239 b 11.763051 2.33 33.7 0.17 0.02798 4.2354 978.9 2.899 113.93614 52.3 7 1 0.000034 0.15 6.7 +0.26-0.17 0.00076 0.8434 25.3 0.058 0.00143 835.02 Kepler-239 c 56.228098 2.51 4.2 0.86 0.03019 1.6645 798.3 3.700 65.28814 22.4 7 1 0.000580 0.42 0.8 +0.04-0.60 0.00478 5.3662 50.8 0.181 0.00575 837.01 Kepler-240 c 7.953528 2.20 55.1 0.36 0.02733 3.3946 907.6 2.598 107.66155 47.5 7 1 0.000025 0.89 55.4 +0.06-0.36 0.00069 0.7428 26.8 0.059 0.00184 837.02 Kepler-240 b 4.144495 1.37 131.0 0.24 0.01702 2.5455 355.6 2.368 68.92658 25.9 7 1 0.000026 0.56 131.6 +0.21-0.24 0.00073 0.7852 20.8 0.116 0.00337

– 88 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

841.01 Kepler-27 b 15.335381^{tt} 4.74 41.1 0.05 0.04882 3.3433 2954.1 3.543 107.00037 100.0 2 1 0.000028 0.21 6.0 +0.27-0.05 0.00066 0.3321 38.7 0.035 0.00101 841.02 Kepler-27 c 31.330229^{tt} 6.17 15.8 0.06 0.06346 3.2678 5000.4 4.592 86.43252 156.2 2 1 0.000046 0.26 2.3 +0.19-0.06 0.00049 0.2283 44.6 0.030 0.00085 842.01 Kepler-241 b 12.718092 2.33 22.0 0.54 0.03200 2.3982 1183.5 3.117 108.35418 60.7 7 1 0.000035 1.03 23.7 +0.02-0.45 0.00313 1.6134 27.6 0.058 0.00163 842.02 Kepler-241 c 36.065978 2.57 5.5 0.07 0.03529 4.2987 1597.0 4.273 131.58185 60.4 7 1 0.000133 1.11 5.8 +0.35-0.07 0.00086 0.7077 35.9 0.070 0.00193 853.01 Kepler-242 b 8.203950 2.61 73.0 0.06 0.02813 3.6368 996.8 2.740 102.69117 65.5 7 1 0.000020 1.60 106.6 +0.39-0.06 0.00075 0.7540 20.4 0.048 0.00139 853.02 Kepler-242 c 14.496481 2.00 34.6 0.37 0.02153 3.1475 560.0 3.222 76.41348 31.3 7 1 0.000083 1.23 50.5 +0.12-0.35 0.00078 0.9894 25.0 0.125 0.00346 857.01 Kepler-243 b 5.715442 2.45 123.3 0.17 0.02670 3.2783 892.3 2.484 107.87832 68.2 7 1 0.000011 1.16 140.8 +0.28-0.17 0.00067 0.6631 18.3 0.042 0.00109 857.02 Kepler-243 c 20.026218 1.99 23.5 0.77 0.02166 22.7209 454.6 1.319 79.90767 13.1 7 1 0.000163 0.97 26.8 +0.16-0.01 0.00239 6.2901 56.0 0.160 0.00404 864.01 Kepler-244 b 4.311792 2.76 219.6 0.52 0.03154 1.2608 1129.4 2.735 106.57568 93.1 7 1 0.000008 1.16 223.7 +0.02-0.44 0.00073 0.4204 17.4 0.038 0.00100 864.02 Kepler-244 d 20.050401 2.31 28.0 0.11 0.02638 1.9690 849.7 4.504 121.08718 43.2 7 1 0.000130 0.97 28.6 +0.33-0.11 0.00071 0.3930 27.7 0.108 0.00377 864.03 Kepler-244 c 9.767292 2.05 72.5 0.49 0.02342 23.2807 629.4 1.373 119.57903 23.7 7 1 0.000046 0.87 73.8 +0.22-0.16 0.00133 4.9576 39.9 0.081 0.00229 869.01 Kepler-245 b 7.490190^{tt} 2.57 75.9 0.20 0.02956 2.9606 1074.0 2.804 107.94919 60.0 7 1 0.000019 0.18 16.1 +0.20-0.20 0.00059 0.4526 22.8 0.040 0.00132 869.02 Kepler-245 d 36.277108^{tt} 3.03 9.4 0.18 0.03493 2.9158 1508.0 4.804 134.27797 52.4 7 1 0.000173 0.21 2.0 +0.21-0.18 0.00079 0.5111 37.8 0.079 0.00264 869.03 Kepler-245 c 17.460812^{tt} 2.18 24.9 0.20 0.02509 13.2735 771.2 2.244 70.26441 27.3 7 1 0.000076 0.17 5.3 +0.26-0.20 0.00096 3.2251 38.8 0.077 0.00256 869.04 3.219773^{tt} 1.56 239.2 0.16 0.01801 2.7765 399.6 2.153 66.00423 27.3 2 1 0.000013 0.12 50.8 +0.28-0.16 0.00063 0.5696 17.2 0.053 0.00191 870.01 Kepler-28 b 5.912252 2.04 54.4 0.48 0.02800 2.6157 929.2 2.435 105.18443 82.7 7 1 0.000011 0.17 10.2 +0.03-0.40 0.00191 0.6255 16.2 0.035 0.00103 870.02 Kepler-28 c 8.985849 1.85 31.7 0.24 0.02544 2.9139 816.1 2.955 108.68153 65.8 7 1 0.000025 0.11 6.0 +0.19-0.24 0.00068 0.5740 17.9 0.053 0.00153

– 89 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

872.01 Kepler-46 b 33.601528^{tt} 7.21 11.7 0.70 0.08360 2.0057 7336.5 4.327 119.67768 256.7 7 2 0.000030 4.03 15.4 +0.03-0.05 0.00116 0.2921 36.6 0.056 0.00046 872.02 Kepler-46 c 6.766589^{tt} 1.64 98.8 0.24 0.01906 3.1708 445.5 2.598 71.05891 25.7 7 1 0.000022 0.92 130.9 +0.20-0.24 0.00062 0.6593 18.4 0.051 0.00192 874.01 Kepler-246 b 4.601820 2.34 167.9 0.58 0.02577 2.1404 747.9 2.227 102.97887 73.8 7 1 0.000008 1.20 204.5 +0.05-0.42 0.00190 0.8299 14.1 0.033 0.00096 874.02 Kepler-246 c 11.187161 1.50 50.3 0.04 0.01657 3.1322 348.0 3.161 70.18172 26.6 7 1 0.000075 0.76 61.3 +0.43-0.04 0.00070 0.7847 17.9 0.125 0.00415 877.01 Kepler-81 b 5.954880 2.51 43.0 0.78 0.03866 1.0224 1441.1 2.530 103.95628 119.8 7 1 0.000008 0.20 8.7 +0.00-0.55 0.00240 1.1496 18.0 0.033 0.00077 877.02 Kepler-81 c 12.039956 2.01 16.4 0.07 0.03087 5.6243 1238.2 2.698 114.22292 79.6 7 1 0.000025 0.11 3.3 +0.33-0.07 0.00075 0.9030 23.4 0.039 0.00112 877.03 Kepler-81 d 20.837846 1.21 7.9 0.71 0.01863 3.9658 356.2 2.570 65.07963 15.2 7 1 0.000181 0.27 1.6 +0.04-0.51 0.00413 5.6489 31.6 0.186 0.00533 880.01 Kepler-82 b 26.443794^{tt} 4.11 23.7 0.59 0.03980 2.1924 1751.5 3.998 127.12502 73.3 7 1 0.000065 0.62 8.8 +0.03-0.45 0.00097 0.8990 25.8 0.059 0.00138 880.02 Kepler-82 c 51.531855^{tt} 5.64 9.7 0.03 0.05470 1.9398 3616.6 6.404 107.11378 153.1 7 1 0.000099 0.84 3.6 +0.27-0.03 0.00044 0.1464 27.7 0.040 0.00099 880.03 Kepler-82 e 5.902206^{tt} 2.47 174.8 0.00 0.02399 2.3692 695.1 2.827 69.78443 58.1 7 1 0.000012 0.37 65.0 +0.35-0.00 0.00041 0.2925 14.8 0.034 0.00115 880.04 Kepler-82 d 2.382961^{tt} 1.77 600.2 0.05 0.01711 2.5500 354.6 2.026 68.08186 32.4 7 1 0.000005 0.27 223.4 +0.33-0.05 0.00041 0.3996 11.2 0.037 0.00132 881.01 21.022441 3.12 17.5 0.11 0.03774 2.8113 1762.8 4.109 140.67633 66.2 2 1 0.000069 0.20 3.5 +0.29-0.11 0.00082 0.4614 37.1 0.067 0.00184 881.02 226.889319 4.00 0.7 0.35 0.04837 5.0469 2820.4 7.140 140.36267 50.3 2 1 0.001660 0.26 0.2 +0.11-0.33 0.00123 1.1082 84.8 0.176 0.00482 884.01 Kepler-247 c 9.439452^{tt} 4.09 50.6 0.14 0.04882 3.6822 2992.4 2.896 110.18536 202.4 7 1 0.000007 1.14 37.0 +0.15-0.14 0.00047 0.3521 19.0 0.017 0.00042 884.02 Kepler-247 d 20.477912^{tt} 3.94 18.2 0.13 0.04703 6.7074 2781.1 3.068 111.66798 42.5 7 1 0.000026 1.10 13.3 +0.26-0.13 0.00080 0.8936 27.6 0.034 0.00068 884.03 Kepler-247 b 3.336160^{tt} 1.64 202.4 0.14 0.01960 3.2432 481.5 2.077 68.31290 43.4 7 1 0.000007 0.46 148.1 +0.33-0.14 0.00059 0.6693 13.7 0.036 0.00118 886.01 Kepler-54 b 8.010260^{tt} 2.07 20.6 0.79 0.03419 0.8361 1135.1 2.870 103.22823 37.7 7 1 0.000030 0.12 3.5 +0.04-0.55 0.00160 1.2853 32.6 0.092 0.00206

– 90 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

886.02 Kepler-54 c 12.072389^{tt} 1.75 11.9 0.86 0.02896 0.2328 745.5 4.324 76.43325 22.0 7 2 0.000100 0.12 2.0 +0.00-0.49 0.00169 0.8484 44.4 0.263 0.00623 886.03 Kepler-54 d 20.995694^{tt} 1.53 5.7 0.23 0.02522 8.9900 742.5 2.698 85.31995 17.6 7 1 0.000143 0.08 0.9 +0.15-0.23 0.00101 2.1406 52.2 0.112 0.00390 892.01 10.371669 2.73 48.8 0.61 0.03302 1.8049 1205.7 3.048 105.61728 73.4 7 1 0.000023 1.58 66.8 +0.06-0.42 0.00100 0.7619 21.9 0.044 0.00115 892.02 3.969961 1.28 174.4 0.11 0.01550 23.6567 294.6 1.133 70.75690 17.8 2 1 0.000022 0.74 238.9 +0.42-0.11 0.00100 6.0295 24.9 0.093 0.00360 896.01 Kepler-248 c 16.239494 4.07 29.6 0.08 0.04490 2.3664 2501.4 4.030 108.56901 134.2 7 1 0.000024 0.49 10.8 +0.30-0.08 0.00065 0.2910 23.2 0.036 0.00079 896.02 Kepler-248 b 6.308205 3.02 102.9 0.38 0.03328 1.7375 1324.7 3.008 107.04657 106.8 7 1 0.000010 0.36 37.6 +0.02-0.38 0.00059 0.3063 17.7 0.033 0.00089 898.01 Kepler-83 b 9.770469 2.53 24.2 0.04 0.03897 5.8532 1965.6 2.507 108.71237 61.1 7 1 0.000022 0.16 5.2 +0.38-0.04 0.00102 0.9527 40.8 0.047 0.00127 898.02 Kepler-83 d 5.169796 1.94 56.7 0.37 0.02998 3.8311 1107.3 2.163 105.63100 44.5 7 1 0.000016 0.13 12.0 +0.12-0.37 0.00108 1.0764 33.4 0.060 0.00170 898.03 Kepler-83 c 20.090227 2.30 9.1 0.54 0.03541 2.3141 1459.8 3.703 80.97543 40.1 7 1 0.000102 0.35 1.9 +0.38-0.33 0.00495 1.4600 48.0 0.103 0.00308 899.01 Kepler-249 c 7.113702 1.51 10.0 0.79 0.02863 1.6038 807.6 2.219 107.32459 49.4 7 1 0.000018 0.09 2.5 +0.05-0.56 0.00141 2.3729 21.1 0.056 0.00140 899.02 Kepler-249 b 3.306539 1.09 27.5 0.26 0.02063 4.8596 494.5 1.767 67.37100 43.9 7 1 0.000010 0.05 6.7 +0.18-0.26 0.00049 1.1446 16.2 0.052 0.00173 899.03 Kepler-249 d 15.368459 1.57 3.6 0.90 0.02980 0.8253 746.0 2.697 80.38889 37.1 7 1 0.000070 0.14 0.9 +0.03-0.45 0.00242 2.6474 28.6 0.069 0.00254 904.01 Kepler-55 d 2.211099^{tt} 1.59 167.6 0.02 0.02347 4.5177 708.5 1.644 103.14912 45.9 7 1 0.000004 0.09 30.1 +0.42-0.02 0.00072 0.8426 19.9 0.031 0.00091 904.02 Kepler-55 b 27.953314^{tt} 2.16 5.6 0.32 0.03199 4.7004 1284.8 3.615 111.75691 19.2 7 1 0.000176 0.12 1.0 +0.11-0.32 0.00103 1.1262 43.8 0.106 0.00309 904.03 Kepler-55 c 42.142596^{tt} 2.07 3.3 0.07 0.03066 2.8248 1223.7 5.151 72.03223 21.4 7 1 0.000268 0.11 0.6 +0.34-0.07 0.00093 0.5195 41.3 0.115 0.00360 904.04 Kepler-55 e 4.617534^{tt} 1.55 61.2 0.72 0.02290 1.5408 537.3 2.132 68.04254 26.1 7 1 0.000021 0.23 11.0 +0.02-0.56 0.00331 1.3759 24.7 0.063 0.00224 904.05 Kepler-55 f 10.198545^{tt} 1.59 21.5 0.46 0.02358 6.4301 668.6 2.173 70.91714 22.7 7 1 0.000045 0.10 3.8 +0.02-0.45 0.00099 2.1037 33.2 0.071 0.00265

– 91 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

906.01 Kepler-250 c 7.156804 2.28 86.4 0.05 0.02592 3.8412 849.6 2.567 107.13628 51.2 7 1 0.000022 1.31 117.8 +0.39-0.05 0.00075 0.7249 23.1 0.058 0.00167 906.02 Kepler-250 d 17.648312 2.18 25.5 0.02 0.02481 20.6191 776.5 1.980 66.54500 26.4 7 1 0.000081 1.25 34.8 +0.46-0.02 0.00105 5.1596 42.1 0.086 0.00297 906.03 Kepler-250 b 4.148141 1.13 178.4 0.75 0.01288 0.8121 167.7 2.403 66.39095 15.0 7 1 0.000046 0.68 243.5 +0.07-0.52 0.00250 1.2576 18.0 0.193 0.00672 907.01 Kepler-251 c 16.514043 2.77 44.4 0.20 0.02849 2.0648 972.9 4.108 109.11632 56.3 7 1 0.000054 0.49 18.8 +0.23-0.20 0.00061 0.4226 21.0 0.065 0.00181 907.02 Kepler-251 d 30.133001 2.77 20.0 0.30 0.02848 2.0257 962.7 4.919 123.38322 44.3 7 1 0.000161 0.49 8.4 +0.12-0.30 0.00071 0.4532 28.6 0.098 0.00301 907.03 Kepler-251 b 4.790936 1.33 235.3 0.25 0.01368 1.9403 222.6 2.705 69.31148 22.8 7 1 0.000037 0.24 99.7 +0.18-0.25 0.00057 0.5555 14.5 0.122 0.00458 907.04 Kepler-251 e 99.640161 2.77 4.1 0.23 0.02856 10.2085 977.0 4.360 131.69312 24.7 7 1 0.001074 0.49 1.7 +0.22-0.23 0.00108 2.6063 52.7 0.174 0.00519 912.01 Kepler-252 c 10.848463 2.15 13.2 0.17 0.03586 3.7048 1657.0 2.976 104.80432 116.1 7 1 0.000015 0.13 3.5 +0.21-0.17 0.00070 0.5664 19.2 0.029 0.00081 912.02 Kepler-252 b 6.668391 1.23 25.1 0.78 0.02056 2.0701 400.8 1.978 70.43483 29.4 7 1 0.000031 0.12 6.5 +0.00-0.55 0.00151 3.6098 19.8 0.081 0.00271 918.01 39.642895^{tt} 10.51 12.5 0.02 0.11258 1.6949 15523.3 6.476 139.59834 886.0 7 0 0.000015 5.26 14.9 +0.08-0.02 0.00015 0.0206 25.3 0.009 0.00021 918.02 5.714893^{tt} 1.32 167.2 0.12 0.01410 8.1612 227.9 1.822 67.86816 9.8 2 1 0.000053 0.66 198.8 +0.32-0.12 0.00076 2.2053 21.1 0.089 0.00381 921.01 Kepler-253 c 10.281951 2.65 51.4 0.49 0.03093 1.5015 1111.3 3.517 108.33982 58.7 7 1 0.000032 1.11 51.7 +0.02-0.44 0.00268 0.4284 24.2 0.062 0.00164 921.02 Kepler-253 d 18.119869 3.17 24.1 0.65 0.03690 1.0085 1468.3 4.290 115.61620 73.5 7 1 0.000066 1.30 24.2 +0.08-0.48 0.00136 0.6271 30.3 0.080 0.00195 921.03 Kepler-253 b 3.783986 1.63 192.2 0.27 0.01898 4.2265 437.2 1.932 66.28036 28.7 7 1 0.000017 0.67 193.4 +0.19-0.27 0.00070 1.1766 21.5 0.077 0.00278 934.01 Kepler-254 b 5.826662 3.87 227.8 0.74 0.03894 0.7020 1554.0 3.032 106.01039 86.7 7 1 0.000010 1.85 255.8 +0.08-0.51 0.00223 0.5882 23.0 0.049 0.00101 934.02 Kepler-254 c 12.412183 2.15 84.6 0.05 0.02168 2.9301 560.3 3.362 75.53938 25.6 7 1 0.000082 1.03 95.0 +0.40-0.05 0.00078 0.6665 29.4 0.122 0.00389 934.03 Kepler-254 d 18.746477 2.50 48.3 0.15 0.02521 2.6558 754.7 3.961 80.12909 27.8 7 1 0.000121 1.19 54.2 +0.31-0.15 0.00083 0.6120 34.4 0.133 0.00384

– 92 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

935.01 Kepler-31 b 20.860674 6.35 89.9 0.82 0.04457 0.2666 1903.9 5.616 113.01073 110.2 7 1 0.000048 1.49 52.3 +0.01-0.34 0.00193 0.2938 22.3 0.168 0.00118 935.02 Kepler-31 c 42.632728 5.65 34.8 0.67 0.03961 0.6778 1664.4 6.455 74.18497 75.5 7 1 0.000162 1.32 20.2 +0.07-0.47 0.00119 0.4118 28.4 0.126 0.00209 935.03 Kepler-31 d 87.648901 4.56 13.3 0.57 0.03198 0.6890 1126.7 8.795 67.93828 46.4 7 1 0.000801 1.11 7.8 +0.01-0.46 0.00247 0.4901 35.5 0.165 0.00468 935.04 9.617264 1.57 255.5 0.03 0.01102 1.1646 141.2 4.160 75.47342 12.7 2 1 0.000230 0.38 148.6 +0.40-0.03 0.00076 0.5171 17.7 0.387 0.01499 936.01 9.467826 2.43 7.3 0.63 0.04507 2.9314 2208.0 2.500 111.41550 129.1 7 1 0.000009 0.12 1.8 +0.11-0.42 0.00169 1.8353 22.0 0.046 0.00054 936.02 0.893044 1.35 159.0 0.00 0.02512 6.4688 737.9 1.083 67.53976 102.7 7 1 0.000001 0.05 37.8 +0.37-0.00 0.00034 0.9233 11.5 0.020 0.00048 938.01 Kepler-255 c 9.946047 2.99 88.8 0.33 0.02939 2.0151 1030.8 3.380 104.70016 54.7 7 1 0.000035 1.18 85.3 +0.15-0.30 0.00069 0.4384 24.1 0.066 0.00210 938.02 1.045619 1.38 1878.7 0.14 0.01351 1.8670 221.5 1.697 66.92104 27.5 7 1 0.000005 0.55 1805.5 +0.29-0.14 0.00051 0.4354 12.8 0.088 0.00287 938.03 Kepler-255 b 5.714606 1.55 189.3 0.01 0.01522 4.5062 282.6 2.238 65.64035 17.1 7 1 0.000052 0.62 181.9 +0.45-0.01 0.00083 1.5635 24.6 0.158 0.00600 939.01 Kepler-256 c 3.388020 2.15 710.3 0.16 0.01517 1.5967 279.9 2.628 103.53221 33.5 7 1 0.000016 0.53 406.1 +0.30-0.16 0.00048 0.3910 11.4 0.085 0.00252 939.02 Kepler-256 d 5.839172 2.48 351.1 0.84 0.01744 0.3167 284.3 3.134 65.08845 26.4 7 1 0.000031 0.63 200.7 +0.02-0.58 0.00132 0.7141 13.2 0.104 0.00318 939.03 Kepler-256 b 1.620493 1.59 1973.0 0.07 0.01116 1.2667 151.2 2.241 65.06776 24.1 7 1 0.000009 0.39 1127.9 +0.38-0.07 0.00045 0.3744 9.2 0.118 0.00339 939.04 Kepler-256 e 10.681572 2.35 156.1 0.04 0.01652 2.1272 331.1 3.542 64.55493 24.7 7 1 0.000066 0.58 89.2 +0.41-0.04 0.00059 0.4588 16.4 0.110 0.00381 941.01 Kepler-257 c 6.581484 5.41 159.1 0.76 0.04778 0.5943 2268.2 3.289 107.78643 143.8 7 2 0.000008 2.72 191.1 +0.01-0.55 0.00242 0.6108 21.1 0.048 0.00063 941.02 Kepler-257 b 2.382667 2.61 599.4 0.09 0.02304 3.5936 667.2 1.812 103.66330 55.7 7 1 0.000006 1.31 720.0 +0.36-0.09 0.00064 0.7435 17.8 0.044 0.00125 941.03 Kepler-257 d 24.664551 4.95 27.1 0.13 0.04372 12.3430 2400.0 2.655 122.02052 84.6 7 2 0.000051 2.48 32.5 +0.33-0.13 0.00113 2.3221 45.8 0.066 0.00102 945.01 25.847511 2.47 49.7 0.55 0.02137 0.5891 512.2 6.181 121.87487 31.2 2 1 0.000223 1.05 49.7 +0.00-0.50 0.00067 0.2374 22.5 0.153 0.00475

– 93 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

945.02 40.716029 2.82 27.2 0.08 0.02448 1.0098 711.8 7.132 79.36097 36.1 7 1 0.000355 1.19 27.1 +0.35-0.08 0.00069 0.1755 28.5 0.155 0.00408 951.01 Kepler-258 b 13.197220 4.06 42.1 0.11 0.04065 3.0941 2115.1 3.418 104.54424 109.8 7 2 0.000019 2.71 66.7 +0.23-0.11 0.00057 0.3313 21.8 0.026 0.00075 951.02 Kepler-258 c 33.653079 3.61 12.0 0.85 0.03617 0.8221 1146.7 4.126 80.79807 41.7 7 1 0.000189 2.43 19.0 +0.03-0.59 0.00323 1.9463 34.1 0.099 0.00360 952.01 Kepler-32 b 5.901263 2.10 29.5 0.08 0.03496 5.1619 1517.2 2.198 104.40735 63.3 7 1 0.000012 0.09 5.1 +0.36-0.08 0.00080 0.9256 31.8 0.043 0.00105 952.02 Kepler-32 c 8.752212 2.22 17.6 0.83 0.03704 1.2602 1263.1 2.406 103.63136 44.0 7 1 0.000028 0.27 3.0 +0.00-0.58 0.00431 2.7021 39.6 0.070 0.00165 952.03 Kepler-32 d 22.780815 2.39 4.9 0.12 0.03984 6.3385 1968.8 3.221 88.20236 49.1 7 1 0.000073 0.11 0.8 +0.28-0.12 0.00089 1.0378 47.8 0.064 0.00179 952.04 Kepler-32 e 2.896027 1.10 79.1 0.35 0.01839 4.2950 406.7 1.709 66.61191 22.7 7 1 0.000015 0.07 13.6 +0.11-0.35 0.00084 1.5244 26.4 0.100 0.00286 952.05 Kepler-32 f 0.742950 0.80 439.3 0.25 0.01339 4.2970 215.4 1.121 66.27552 18.8 6 1 0.000004 0.06 75.4 +0.22-0.25 0.00080 2.1512 20.6 0.115 0.00300 954.01 Kepler-259 b 8.115317 2.80 143.8 0.75 0.02856 0.9247 824.1 2.954 107.51955 63.6 7 1 0.000022 1.37 164.2 +0.00-0.55 0.00227 0.9396 17.8 0.054 0.00159 954.02 Kepler-259 c 36.924931 2.70 19.1 0.03 0.02755 3.2028 909.3 4.723 107.22336 40.1 7 1 0.000181 1.31 21.8 +0.37-0.03 0.00064 0.5429 29.3 0.090 0.00267 961.01 Kepler-42 b 1.213770 2.47 170.0 0.78 0.04459 24.0219 1527.0 0.525 103.48286 99.7 2 1 0.000001 0.21 81.0 +0.07-0.01 0.00148 4.5373 18.5 0.017 0.00026 961.02 Kepler-42 c 0.453290 2.73 680.2 0.92 0.04925 4.9123 1208.4 0.482 66.86906 142.3 2 1 0.0000001 0.26 324.0 +0.01-0.15 0.00277 7.2690 14.7 0.034 0.00020 961.03 Kepler-42 d 1.865107 2.45 95.6 0.95 0.04409 8.7055 925.5 0.536 66.79104 62.5 2 2 0.000002 2.76 45.6 +0.16-0.03 0.04955 3.6082 21.8 0.044 0.00054 966.01 0.379462 51.54 16486.8 1.22 0.28118 0.6748 1842.9 0.917 103.24768 121.4 0 0 0.0000003 20.91 12984.5 +0.01-0.17 0.07542 0.0293 8.1 0.012 0.00007 966.02 7.769308 8.26 285.4 0.19 0.04508 1.0457 -1382.8 6.717 6440.44385 6.1 -1 0 0.000276 2.57 224.8 +0.17-0.19 0.00281 0.4498 905.2 1.484 0.04682 986.01 Kepler-260 b 8.187399 2.01 89.8 0.46 0.02135 1.9014 529.1 3.027 193.86771 61.7 7 1 0.000022 0.55 68.2 +0.08-0.39 0.00049 0.4959 12.4 0.050 0.00136 986.02 Kepler-260 c 76.050178 1.74 4.6 0.66 0.01849 0.9406 369.4 6.826 94.71209 21.8 7 1 0.001026 0.54 3.5 +0.05-0.49 0.00287 0.9464 23.0 0.219 0.00705

– 94 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

988.01 Kepler-261 b 10.381227 2.18 49.2 0.16 0.02510 4.3237 777.5 2.759 201.02361 114.1 7 1 0.000016 0.14 10.1 +0.22-0.16 0.00043 0.5996 10.7 0.028 0.00075 988.02 Kepler-261 c 24.570858 2.00 15.7 0.19 0.02305 9.9776 653.1 2.761 68.87408 67.4 7 1 0.000069 0.14 3.2 +0.24-0.19 0.00059 1.9795 16.5 0.052 0.00159 989.01 81.216312^{tt} 12.61 5.3 0.97 0.13036 2.0675 7966.8 4.029 117.27216 1.5 -1 0 0.000243 17.13 6.3 +0.35-0.07 0.16438 0.5869 266.1 0.107 0.00136 989.02 0.817026^{tt} 3.39 2437.2 0.54 0.03508 0.4766 1367.3 2.247 65.83564 157.4 1 1 0.000001 1.72 2919.0 +0.03-0.43 0.00191 0.2143 17.1 0.027 0.00052 989.03 16.159276 14.84 45.1 1.10 0.15346 0.0272 1694.8 6.180 75.98028 54.5 2 0 0.000119 15.69 54.0 +0.19-0.15 0.14248 0.0052 59.2 0.206 0.00377 993.01 Kepler-262 c 21.853722 1.64 35.0 0.07 0.01702 4.5347 350.7 3.490 77.31467 24.1 7 1 0.000187 0.68 34.5 +0.39-0.07 0.00070 1.1923 20.7 0.154 0.00506 993.02 Kepler-262 b 13.060855 1.36 69.3 0.76 0.01417 0.9620 202.2 3.278 70.63086 19.6 7 1 0.000164 0.59 68.3 +0.01-0.56 0.00189 1.6533 17.7 0.241 0.00866 999.01 Kepler-263 b 16.568087 2.67 29.4 0.08 0.03112 2.1352 1197.2 4.143 79.15154 47.1 7 1 0.000065 1.45 38.1 +0.37-0.08 0.00084 0.4354 33.6 0.073 0.00238 999.02 Kepler-263 c 47.332773 2.47 7.2 0.06 0.02877 14.9682 1014.6 3.069 84.40950 19.3 7 1 0.000456 1.35 9.4 +0.41-0.06 0.00136 5.2235 68.5 0.187 0.00572 1001.01 Kepler-264 b 40.806231 3.33 49.9 0.93 0.01970 0.0087 310.2 14.253 88.71209 60.7 7 1 0.000538 0.74 23.6 +0.01-0.64 0.00181 0.0638 8.0 0.337 0.00790 1001.02 Kepler-264 c 140.101261 2.83 9.7 0.44 0.01672 0.1589 320.3 17.933 149.22078 23.2 7 1 0.003678 0.58 4.6 +0.11-0.37 0.00044 0.0386 11.3 0.291 0.01187 1015.01 9.428869 2.95 253.3 0.28 0.02265 0.8550 605.3 4.459 73.10574 53.5 2 1 0.000187 1.29 267.8 +0.17-0.28 0.00127 0.2752 54.8 0.279 0.01061 1015.02 4.088790 1.46 767.5 0.18 0.01125 0.8970 184.8 3.363 68.75673 19.4 2 1 0.000043 0.64 811.3 +0.26-0.18 0.00054 0.2359 11.6 0.173 0.00527 1050.01 1.269088 1.38 779.6 0.03 0.01641 3.6851 336.7 1.455 66.34312 90.3 7 1 0.000001 0.09 157.4 +0.43-0.03 0.00042 0.6929 5.7 0.023 0.00067 1050.02 2.853145 1.26 251.1 0.29 0.01495 7.7762 271.2 1.420 66.79566 49.5 7 1 0.000006 0.09 50.7 +0.15-0.29 0.00045 1.9594 8.6 0.043 0.00130 1052.01 Kepler-265 c 17.028937 2.63 78.3 0.34 0.02186 1.2189 556.0 4.732 76.33642 33.3 7 1 0.000136 0.55 39.0 +0.10-0.34 0.00063 0.3088 22.8 0.133 0.00479 1052.02 Kepler-265 b 6.846262 1.86 265.1 0.64 0.01547 0.6092 256.8 3.590 65.17037 19.8 7 1 0.000063 0.45 132.2 +0.02-0.49 0.00197 0.5596 17.2 0.156 0.00564

– 95 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1052.03 Kepler-265 e 67.831024 2.59 12.4 0.02 0.02150 1.7277 547.5 7.066 58.89695 18.4 7 1 0.001396 0.55 6.2 +0.42-0.02 0.00097 0.4207 40.0 0.289 0.01335 1052.04 Kepler-265 d 43.130617 2.49 22.7 0.69 0.02072 5.3359 454.0 3.066 99.27537 13.4 6 1 0.000658 0.54 11.3 +0.08-0.49 0.00134 6.2494 48.6 0.265 0.00980 1060.01 12.109808 2.57 252.7 0.42 0.01529 0.4475 265.5 5.651 73.20908 37.5 7 1 0.000085 0.69 168.4 +0.45-0.23 0.00041 0.1095 10.3 0.121 0.00403 1060.02 4.757867 1.78 888.4 0.06 0.01059 0.5380 135.1 4.257 70.71303 25.2 2 1 0.000052 0.48 592.2 +0.40-0.06 0.00042 0.1484 7.4 0.244 0.00760 1060.03 20.496550 2.07 125.5 0.20 0.01233 0.5976 177.3 6.564 80.45557 20.8 2 1 0.000320 0.56 83.7 +0.27-0.20 0.00055 0.1417 12.3 0.205 0.00959 1060.04 8.193459 1.85 424.6 0.67 0.01102 0.1959 130.1 5.397 71.98204 19.5 2 1 0.000101 0.50 283.1 +0.07-0.48 0.00046 0.2224 8.8 0.240 0.00803 1069.01 8.704172 3.93 148.4 0.65 0.03168 1.4732 1085.6 2.962 290.55997 80.2 2 1 0.000021 1.85 174.9 +0.05-0.46 0.00099 1.1586 19.2 0.050 0.00119 1069.02 2.466975 1.92 814.6 0.14 0.01548 5.7237 287.5 1.548 287.92963 30.2 7 1 0.000012 0.91 960.1 +0.34-0.14 0.00061 1.6332 15.3 0.076 0.00222 1070.01 Kepler-266 b 6.618330 2.48 225.0 0.36 0.02208 0.9557 572.4 3.717 293.36960 33.8 7 1 0.000048 1.20 267.7 +0.07-0.36 0.00066 0.2354 22.7 0.093 0.00323 1070.02 Kepler-266 c 107.723601 3.89 5.4 0.32 0.03469 1.6351 1429.9 8.080 287.18347 31.6 7 1 0.001643 1.89 6.4 +0.14-0.32 0.00110 0.4106 58.3 0.223 0.00744 1070.03 92.756687 1.91 6.7 0.09 0.01701 2.9227 355.0 6.529 300.65872 6.9 -1 1 0.022717 0.95 7.9 +0.39-0.09 0.00181 3.4141 61.1 1.550 0.05152 1078.01 Kepler-267 b 3.353728 1.98 66.2 0.22 0.03271 8.7317 1304.9 1.494 67.86887 55.7 7 1 0.000007 0.09 11.2 +0.26-0.22 0.00094 2.0147 36.3 0.043 0.00112 1078.02 Kepler-267 c 6.877450 2.13 25.2 0.19 0.03518 24.9184 1512.9 1.350 65.08303 45.7 7 1 0.000016 0.11 4.3 +0.43-0.00 0.00133 4.4122 52.9 0.042 0.00123 1078.03 Kepler-267 d 28.464515 2.27 3.8 0.48 0.03745 9.0554 1638.4 2.742 91.04035 32.1 7 1 0.000180 0.12 0.6 +0.10-0.39 0.00130 2.9630 68.7 0.098 0.00334 1089.01 86.678691 9.72 9.3 0.44 0.08387 0.6670 8017.6 10.195 108.59541 313.3 7 0 0.000106 5.17 11.6 +0.04-0.09 0.00057 0.0701 32.9 0.063 0.00065 1089.02 12.218279 4.84 126.1 0.72 0.04176 2.4091 1805.1 2.646 73.32023 99.5 7 2 0.000018 2.58 156.1 +0.10-0.49 0.00179 2.3449 25.8 0.069 0.00083 1102.01 Kepler-24 c 12.333360 3.97 169.5 0.97 0.02821 0.0177 517.4 6.102 70.58878 37.0 7 2 0.000119 5.27 103.7 +0.10-0.04 0.03687 0.0258 24.4 0.324 0.00540

– 96 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1102.02 Kepler-24 b 8.145207 3.43 295.6 0.94 0.02440 0.0601 456.0 4.389 73.56330 38.3 7 1 0.000059 0.85 180.8 +0.02-0.65 0.00243 0.4814 16.3 0.116 0.00425 1102.03 Kepler-24 e 18.998355 2.78 94.4 0.10 0.01972 6.4393 461.9 2.963 77.74357 22.9 7 1 0.000157 0.64 57.7 +0.34-0.10 0.00078 1.6883 31.2 0.248 0.00555 1102.04 Kepler-24 d 4.244384 1.67 691.3 0.29 0.01184 1.2817 166.0 2.945 70.06411 20.2 7 1 0.000053 0.39 422.9 +0.18-0.29 0.00061 0.4460 14.5 0.214 0.00680 1113.01 Kepler-268 b 25.934138 2.55 61.3 0.07 0.01836 2.4023 398.0 4.571 82.76209 41.5 7 1 0.000142 0.47 26.8 +0.31-0.07 0.00042 0.4315 12.6 0.090 0.00339 1113.02 Kepler-268 c 83.446393 3.38 13.0 0.91 0.02432 0.2022 494.4 7.219 91.68510 36.1 7 1 0.000761 0.69 5.7 +0.02-0.64 0.00213 0.9587 17.1 0.110 0.00592 1119.01 7.244797 0.79 165.0 0.42 0.00721 3.0682 61.2 2.478 72.10378 33.7 1 1 0.000031 0.03 0.0 +0.05-0.42 0.00025 1.0223 2.8 0.094 0.00252 1119.02 13.554768 0.74 71.5 0.29 0.00676 7.6332 54.6 2.374 72.82162 22.1 0 1 0.000119 0.04 0.0 +0.16-0.29 0.00034 3.5278 4.5 0.198 0.00652 1127.01 Kepler-269 b 5.326718 2.47 258.5 0.62 0.02359 0.6264 607.7 3.387 290.12204 36.7 7 1 0.000035 1.15 287.0 +0.03-0.49 0.00293 0.3720 22.6 0.111 0.00329 1127.02 Kepler-269 c 8.127899 1.69 146.6 0.61 0.01618 0.6196 285.0 3.899 291.68805 16.6 7 1 0.000149 0.80 162.8 +0.34-0.40 0.00237 0.3436 25.3 0.254 0.00938 1127.03 2.836635 1.34 601.3 0.71 0.01284 0.3428 166.5 3.019 286.80722 12.5 2 1 0.000059 0.63 667.5 +0.23-0.47 0.00198 0.4736 20.7 0.359 0.00766 1134.01 200.608105 34.39 0.9 1.21 0.40181 0.7336 18400.3 9.292 210.05792 228.8 0 1 0.001327 31.31 1.4 +0.38-0.19 0.26014 0.1159 370.4 0.199 0.00311 1134.02 200.612939 45.61 0.9 1.42 0.53284 0.3635 7920.3 9.445 389.83969 1.0 -1 1 0.003330 39.08 1.4 +0.27-0.40 0.30331 0.0791 397.4 0.446 0.00599 1148.01 Kepler-270 b 11.476094 2.01 226.1 0.14 0.01262 0.8490 185.8 4.865 68.39510 29.3 7 1 0.000071 0.40 103.5 +0.30-0.14 0.00040 0.1833 8.9 0.118 0.00368 1148.02 Kepler-270 c 25.262887 1.77 79.9 0.10 0.01109 4.2892 148.7 3.698 67.21176 14.0 7 1 0.000599 0.37 36.6 +0.35-0.10 0.00093 2.1000 22.8 1.249 0.01785 1151.01 Kepler-271 b 5.217738 0.89 205.8 0.10 0.00922 1.1516 100.9 3.387 67.81950 39.2 7 1 0.000043 0.16 89.4 +0.34-0.10 0.00033 0.2709 5.5 0.126 0.00465 1151.02 Kepler-271 c 7.410935 1.00 128.0 0.20 0.01045 1.5292 130.9 3.413 68.74764 29.7 7 1 0.000049 0.18 55.6 +0.25-0.20 0.00037 0.3832 6.3 0.104 0.00404 1161.01 Kepler-272 c 6.057342 1.79 163.4 0.03 0.01766 1.0694 389.6 3.695 68.92549 37.3 7 1 0.000037 0.96 208.1 +0.40-0.03 0.00055 0.2168 14.2 0.093 0.00309

– 97 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1161.02 Kepler-272 d 10.937304 2.25 73.4 0.89 0.02222 0.4184 416.2 3.084 69.98503 26.3 7 1 0.000073 1.22 93.5 +0.00-0.62 0.00189 1.7040 22.7 0.094 0.00372 1161.03 Kepler-272 b 2.971353 1.43 421.1 0.04 0.01413 1.4131 246.4 2.648 67.38675 28.0 7 1 0.000017 0.77 536.4 +0.43-0.04 0.00059 0.3512 12.3 0.090 0.00305 1163.01 Kepler-273 b 2.936532 1.50 435.0 0.04 0.01685 5.2599 340.8 1.704 68.71482 38.9 7 1 0.000009 0.86 581.1 +0.43-0.04 0.00055 1.2914 13.1 0.055 0.00188 1163.02 Kepler-273 c 8.014927 1.98 111.8 0.94 0.02227 0.1177 378.8 3.379 67.83202 32.5 7 1 0.000052 1.15 149.3 +0.00-0.66 0.00255 1.0352 15.6 0.078 0.00375 1175.01 31.595187 2.50 87.1 0.26 0.01127 0.0903 152.0 14.038 75.95774 23.4 2 1 0.000914 0.77 63.3 +0.17-0.26 0.00041 0.0197 7.8 0.345 0.01050 1175.02 17.157093 2.55 195.1 0.86 0.01149 0.0149 121.0 11.472 66.69188 24.8 7 1 0.000270 0.81 141.8 +0.04-0.58 0.00087 0.0410 6.8 0.232 0.00828 1194.01 8.707925 1.81 27.6 0.28 0.02726 4.4331 888.3 2.520 296.05685 32.9 2 1 0.000049 0.26 14.0 +0.19-0.28 0.00089 1.2239 36.8 0.095 0.00233 1194.02 14.862496 1.36 13.4 0.17 0.02046 6.0820 505.7 2.759 287.56522 14.9 2 1 0.000226 0.20 6.8 +0.28-0.17 0.00118 1.9113 46.3 0.225 0.00682 1194.03 4.176376 1.13 71.8 0.06 0.01701 3.1111 350.7 2.282 285.99387 16.8 2 1 0.000032 0.17 36.4 +0.39-0.06 0.00083 0.9337 26.8 0.125 0.00359 1196.01 3.982152 2.22 477.7 0.82 0.02017 0.6961 392.9 2.245 68.52847 32.8 1 1 0.000018 1.22 598.5 +0.04-0.57 0.00217 1.3912 18.7 0.103 0.00311 1196.02 Kepler-274 b 11.634788 1.54 117.1 0.20 0.01405 0.5680 239.0 5.541 73.49696 19.2 7 1 0.000134 0.84 146.7 +0.23-0.20 0.00138 0.1672 17.2 0.171 0.00720 1196.03 Kepler-274 c 33.197861 1.84 28.7 0.14 0.01672 3.0465 332.1 4.544 75.10044 14.2 7 1 0.000894 1.00 36.0 +0.32-0.14 0.00119 2.1741 43.4 0.623 0.01769 1198.01 Kepler-275 c 16.088134 3.38 141.9 0.06 0.02239 0.7077 587.1 5.888 72.49745 33.3 7 1 0.000164 0.64 62.5 +0.39-0.06 0.00061 0.1525 22.8 0.153 0.00519 1198.02 Kepler-275 b 10.300682 2.34 257.5 0.57 0.01548 0.4278 266.3 4.967 75.73999 15.8 7 1 0.000254 0.45 113.5 +0.02-0.48 0.00071 0.2110 20.7 0.270 0.01185 1198.03 Kepler-275 d 35.676062 3.33 49.3 0.73 0.02208 0.2501 502.7 7.634 78.00066 20.1 7 1 0.000641 0.74 21.8 +0.01-0.54 0.00269 0.3285 31.4 0.321 0.01103 1198.04 1.008641 1.08 5607.2 0.06 0.00714 2.1979 57.3 1.589 65.11885 3.8 -1 1 1.534456 0.79 2471.9 +0.69-0.06 0.00505 8.1463 29.1 0.411 274.68494 1203.01 Kepler-276 c 31.884362 3.40 32.4 0.71 0.02977 0.7491 929.5 5.315 93.20451 32.8 7 1 0.000323 1.70 35.4 +0.25-0.48 0.00553 0.6641 44.9 0.203 0.00533

– 98 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1203.02 Kepler-276 b 14.128410 2.87 96.1 0.85 0.02516 0.4418 586.6 3.733 75.89515 22.4 7 1 0.000111 1.35 105.0 +0.02-0.59 0.00215 1.1309 33.8 0.143 0.00418 1203.03 Kepler-276 d 48.648869 2.81 18.4 0.01 0.02464 14.4143 718.9 3.128 105.13580 13.3 7 1 0.000877 1.32 20.1 +0.43-0.01 0.00167 5.2282 83.6 0.579 0.00919 1215.01 Kepler-277 b 17.324055 2.49 135.6 0.72 0.01536 0.1039 243.1 8.004 75.10140 52.3 7 1 0.000129 0.49 64.2 +0.01-0.53 0.00061 0.0859 6.7 0.125 0.00428 1215.02 Kepler-277 c 33.006496 2.34 57.2 0.19 0.01447 0.7117 249.3 7.292 78.38846 39.0 7 1 0.000235 0.45 27.1 +0.24-0.19 0.00041 0.1440 9.1 0.145 0.00469 1221.01 Kepler-278 b 30.160546^{tt} 4.07 111.6 0.37 0.01269 0.5065 195.1 7.508 71.51248 36.4 5 1 0.000311 0.16 11.8 +0.09-0.37 0.00040 0.1422 6.8 0.152 0.00644 1221.02 Kepler-278 c 51.078775^{tt} 3.59 55.3 0.76 0.01121 0.0871 126.1 11.315 85.34892 20.9 5 1 0.000890 0.43 5.8 +0.04-0.53 0.00133 0.1048 7.1 0.281 0.00953 1231.01 22.342970 3.33 5.1 0.16 0.05683 0.6787 4165.5 6.821 88.08434 123.1 1 1 0.000051 0.34 2.0 +0.17-0.16 0.00076 0.0683 41.6 0.055 0.00151 1231.02 10.423534 1.13 14.2 0.27 0.01924 0.5831 556.5 5.234 71.01889 19.9 1 1 0.000127 0.13 5.6 +0.19-0.27 0.00104 0.1732 33.1 0.242 0.00853 1236.01 Kepler-279 c 35.740844^{tt} 5.34 85.3 0.79 0.02801 0.1575 772.4 8.109 84.06380 70.3 7 1 0.000182 0.99 45.5 +0.08-0.54 0.00115 0.2345 13.6 0.166 0.00261 1236.02 Kepler-279 b 12.309681^{tt} 3.62 356.5 0.69 0.01898 0.2191 381.9 5.868 70.68644 53.8 7 1 0.000051 0.71 190.0 +0.02-0.49 0.00150 0.1605 9.1 0.080 0.00246 1236.03 Kepler-279 d 54.399606^{tt} 4.96 48.7 0.92 0.02602 0.0779 564.1 8.185 81.87848 30.9 7 1 0.000457 0.97 25.9 +0.00-0.65 0.00193 0.4891 16.4 0.246 0.00469 1239.01 0.783281 1.62 4770.5 0.12 0.01409 1.6494 238.8 1.620 288.94882 48.5 2 1 0.000002 0.66 4855.6 +0.29-0.12 0.00035 0.3131 7.5 0.043 0.00138 1239.02 3.174067 1.65 712.1 0.21 0.01438 2.1749 246.9 2.295 290.05579 29.8 2 1 0.000019 0.68 724.8 +0.23-0.21 0.00047 0.4875 11.2 0.072 0.00287 1240.01 Kepler-280 b 2.139542 1.45 746.8 0.33 0.01503 1.9650 263.7 2.020 66.65260 53.3 7 1 0.000006 0.70 851.7 +0.12-0.33 0.00038 0.4551 7.6 0.048 0.00150 1240.02 Kepler-280 c 4.807091 2.01 243.9 0.68 0.02078 24.3506 442.0 0.901 67.64249 40.7 7 1 0.000009 0.97 278.1 +0.16-0.01 0.00105 6.1293 20.6 0.076 0.00104 1241.01 Kepler-56 c 21.405839 9.38 318.9 0.83 0.02032 0.0325 379.1 10.535 80.08227 49.2 7 1 0.000180 0.70 48.3 +0.00-0.57 0.00134 0.0569 8.5 0.136 0.00568 1241.02 Kepler-56 b 10.501883 5.27 828.3 0.13 0.01141 0.0509 162.1 12.112 68.58893 39.3 7 1 0.000190 0.25 125.4 +0.29-0.13 0.00035 0.0102 6.3 0.340 0.01094

– 99 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1258.01 Kepler-281 c 36.337373 5.31 16.8 0.77 0.05413 0.3580 2912.6 6.809 93.40092 98.1 7 2 0.000111 2.06 15.8 +0.09-0.37 0.00238 0.4166 41.0 0.220 0.00175 1258.02 Kepler-281 b 14.646008 2.82 56.7 0.92 0.02874 0.0492 671.9 6.293 69.51691 34.2 7 1 0.000139 1.12 53.2 +0.00-0.66 0.00251 0.2878 28.7 0.125 0.00588 1261.01 133.461546 7.60 4.8 0.28 0.06517 0.8049 4995.8 11.479 149.03955 180.6 7 0 0.000333 3.33 5.0 +0.12-0.21 0.00052 0.0782 34.2 0.076 0.00145 1261.02 15.194303 2.03 86.9 0.21 0.01743 4.6118 359.5 3.016 75.73615 22.8 7 1 0.000111 0.89 90.3 +0.21-0.21 0.00074 1.1785 24.6 0.137 0.00476 1270.01 Kepler-57 b 5.729329^{tt} 2.45 119.7 0.62 0.02900 22.4559 899.1 1.056 71.55826 61.0 7 1 0.000007 0.80 98.3 +0.14-0.04 0.00108 5.4055 21.2 0.030 0.00077 1270.02 Kepler-57 c 11.609074^{tt} 1.85 46.8 0.04 0.02190 20.2196 589.0 1.728 66.99407 31.3 7 1 0.000031 0.60 38.4 +0.42-0.04 0.00067 4.1166 20.5 0.049 0.00162 1276.01 22.790147 2.22 27.6 0.65 0.02369 0.7218 606.3 5.095 71.68459 45.9 2 1 0.000115 0.83 24.5 +0.01-0.52 0.00217 0.4248 17.2 0.108 0.00283 1276.02 13.260825 1.20 56.5 0.40 0.01276 1.1617 192.4 4.265 72.09444 18.1 2 1 0.000184 0.44 50.1 +0.05-0.40 0.00060 0.3855 14.2 0.208 0.00774 1278.01 Kepler-282 d 24.805787 2.28 28.9 0.10 0.02312 0.9645 631.8 6.121 78.07291 39.8 7 1 0.000152 0.54 17.1 +0.32-0.10 0.00054 0.1643 20.1 0.101 0.00304 1278.02 Kepler-282 e 44.346937 2.57 13.3 0.09 0.02605 1.4938 803.6 6.440 94.31946 41.8 7 1 0.000309 0.61 7.9 +0.37-0.09 0.00066 0.3214 24.7 0.131 0.00359 1278.03 Kepler-282 b 9.220524 1.01 107.1 0.02 0.01028 0.7054 124.9 4.847 71.05444 11.7 7 1 0.000341 0.25 63.8 +0.40-0.02 0.00068 0.2327 14.6 0.393 0.02523 1278.04 Kepler-282 c 13.638723 1.20 64.1 0.07 0.01217 0.6849 174.3 5.573 74.77809 14.4 7 1 0.000491 0.29 38.1 +0.38-0.07 0.00066 0.1829 16.2 0.331 0.02213 1279.01 14.374495 2.01 88.9 0.06 0.01681 1.1627 340.6 4.779 71.20434 58.9 7 1 0.000056 0.38 40.2 +0.37-0.06 0.00036 0.2020 7.7 0.065 0.00235 1279.02 9.651999 1.12 151.0 0.26 0.00934 0.9303 103.2 4.331 65.15501 18.9 2 1 0.000110 0.22 68.2 +0.23-0.26 0.00047 0.2712 6.9 0.169 0.00604 1298.01 Kepler-283 b 11.008151 2.13 15.3 0.51 0.03441 7.4231 1387.1 2.087 76.22626 51.3 7 1 0.000029 0.26 2.7 +0.38-0.31 0.00396 2.5135 42.2 0.067 0.00142 1298.02 Kepler-283 c 92.743711 1.82 0.9 0.44 0.02940 2.5661 1052.0 6.279 106.31145 20.3 7 1 0.001413 0.12 0.2 +0.04-0.42 0.00150 0.9283 70.3 0.357 0.00730 1301.01 Kepler-284 b 12.699149 2.24 54.5 0.24 0.02516 4.7221 765.9 2.819 117.98515 29.1 7 1 0.000071 0.98 57.3 +0.21-0.24 0.00090 1.1445 36.0 0.099 0.00361

– 100 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1301.02 Kepler-284 c 37.514456 2.61 13.0 0.62 0.02942 1.1312 944.4 5.352 122.30068 29.8 7 1 0.000350 1.18 13.6 +0.27-0.40 0.00348 0.8866 42.3 0.150 0.00575 1305.01 Kepler-285 b 2.633867 1.34 386.5 0.09 0.01522 2.6376 283.9 2.061 67.56281 29.9 7 1 0.000012 0.58 403.5 +0.36-0.09 0.00053 0.6414 13.6 0.084 0.00251 1305.02 Kepler-285 c 6.186676 1.12 122.3 0.08 0.01275 2.1884 198.7 2.908 69.63351 16.6 7 1 0.000059 0.49 127.7 +0.38-0.08 0.00065 0.6779 16.4 0.198 0.00507 1306.01 Kepler-286 b 1.796302 1.24 886.4 0.06 0.01319 2.0600 204.3 1.974 66.33057 24.2 7 1 0.000009 0.25 430.6 +0.40-0.06 0.00055 0.5692 12.7 0.095 0.00307 1306.02 Kepler-286 c 3.468095 1.37 366.3 0.20 0.01453 2.3673 250.1 2.305 69.00318 22.2 7 1 0.000023 0.27 177.9 +0.24-0.20 0.00060 0.6659 16.0 0.115 0.00392 1306.03 Kepler-286 d 5.914323 1.33 173.7 0.06 0.01413 2.7719 236.9 2.655 66.48698 17.0 7 1 0.000054 0.27 84.3 +0.40-0.06 0.00068 0.8108 18.8 0.166 0.00524 1306.04 Kepler-286 e 29.221289 1.77 20.9 0.64 0.01877 2.0350 379.3 3.930 72.33017 14.7 7 1 0.000370 0.43 10.1 +0.30-0.42 0.00270 1.3197 32.3 0.216 0.00718 1307.01 Kepler-287 c 44.851896 3.26 17.9 0.83 0.02897 1.8716 791.6 3.584 105.46300 40.3 7 1 0.000247 1.49 19.2 +0.02-0.59 0.00190 3.7502 28.2 0.125 0.00325 1307.02 Kepler-287 b 20.342199 2.33 51.5 0.24 0.02066 14.5855 505.6 2.257 70.69875 32.6 7 1 0.000084 1.06 55.4 +0.25-0.24 0.00076 4.3308 24.9 0.102 0.00254 1312.01 6.146993 1.65 366.6 0.38 0.01392 1.1707 225.0 3.335 68.07336 25.8 2 1 0.000056 0.71 370.0 +0.08-0.38 0.00053 0.3473 13.6 0.153 0.00478 1312.02 31.245504 3.96 41.9 0.98 0.03339 0.0028 651.8 15.265 72.70719 4.8 -1 1 0.020183 1.85 42.3 +0.00-0.68 0.00629 0.1518 83.2 0.967 0.04637 1316.01 7.649686 1.48 442.1 0.90 0.00803 0.0227 55.2 6.704 71.33360 30.7 5 1 0.000072 0.31 199.7 +0.04-0.63 0.00068 0.0904 2.6 0.139 0.00592 1316.02 12.375577 0.80 232.8 0.42 0.00435 1.1906 21.4 4.063 76.42323 6.1 -1 1 0.002888 0.18 105.2 +0.03-0.42 0.00057 1.8213 5.5 0.833 0.03574 1332.01 Kepler-288 c 19.305772 2.85 66.7 0.06 0.02389 2.3619 691.7 4.192 306.19055 38.0 7 1 0.000135 1.36 77.8 +0.37-0.06 0.00066 0.4354 24.4 0.083 0.00328 1332.02 Kepler-288 b 6.097326 1.67 309.3 0.21 0.01402 1.3900 236.7 3.306 287.06412 20.2 7 1 0.000064 0.80 360.9 +0.22-0.21 0.00061 0.3639 16.1 0.148 0.00575 1332.03 Kepler-288 d 56.633742 2.67 15.9 0.41 0.02244 1.7874 589.2 6.039 68.55296 24.1 7 1 0.000908 1.27 18.5 +0.05-0.39 0.00087 0.5573 35.5 0.241 0.01046 1336.01 Kepler-58 b 10.218558 2.82 174.3 0.87 0.02294 0.2134 474.2 4.023 69.86912 22.4 7 1 0.000077 1.34 191.6 +0.00-0.62 0.00223 0.6310 21.7 0.132 0.00539

– 101 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1336.02 Kepler-58 c 54.155743 2.66 99.1 0.54 0.02159 7.1608 594.6 3.833 60.24886 26.4 7 1 4.799833 2.03 108.9 +0.06-0.53 0.01302 6.4175 6031.4 1.105 11.67171 1336.03 Kepler-58 d 40.101371 2.94 28.2 0.90 0.02390 0.2569 491.9 5.443 65.71799 19.2 7 1 0.000612 1.40 31.0 +0.01-0.62 0.00209 1.1889 35.4 0.273 0.00903 1338.01 3.222939 1.45 555.6 0.14 0.01362 1.1224 222.0 2.913 111.07032 33.8 7 1 0.000017 0.65 594.5 +0.32-0.14 0.00045 0.2649 10.2 0.095 0.00275 1338.02 42.035781 1.73 18.2 0.59 0.01621 0.7917 291.7 6.346 111.25999 17.9 2 1 0.001258 0.78 19.5 +0.10-0.43 0.00077 0.4829 23.2 0.394 0.01212 1342.01 3.773665 1.33 637.7 0.10 0.01212 1.5161 174.2 2.783 67.06364 28.7 0 1 0.000020 0.66 742.2 +0.36-0.10 0.00043 0.3536 8.8 0.095 0.00322 1342.02 8.181852 1.74 227.6 0.20 0.01590 4.8028 295.2 2.420 67.81125 32.3 7 1 0.000039 0.87 264.9 +0.22-0.20 0.00047 1.0684 13.4 0.083 0.00249 1353.01 Kepler-289 c 125.866438 13.04 5.9 0.25 0.10283 1.8084 12378.7 9.001 169.65630 824.7 7 2 0.000095 2.45 2.7 +0.06-0.09 0.00036 0.0977 27.2 0.031 0.00033 1353.02 Kepler-289 b 34.543901 2.43 33.2 0.11 0.01913 8.0362 432.6 3.355 65.68686 31.5 7 1 0.000238 0.46 15.0 +0.35-0.11 0.00066 1.9244 22.2 0.118 0.00376 1358.01 5.644928 2.37 67.8 0.81 0.03134 0.9970 939.9 2.343 289.73511 68.9 2 1 0.000015 1.05 77.6 +0.09-0.55 0.00184 1.7016 19.2 0.059 0.00125 1358.02 8.742928 1.57 37.2 0.49 0.02073 3.1676 491.4 2.556 291.59262 31.1 2 1 0.000064 0.69 42.5 +0.06-0.43 0.00072 1.2028 21.6 0.103 0.00324 1358.03 3.648328 1.09 119.2 0.29 0.01447 3.3153 248.4 2.044 288.38968 21.4 2 1 0.000030 0.48 136.4 +0.18-0.29 0.00063 1.0965 15.8 0.101 0.00346 1358.04 2.345845 0.99 215.2 0.01 0.01307 4.8441 205.0 1.622 287.11002 20.7 2 1 0.000016 0.44 246.3 +0.45-0.00 0.00061 1.4795 14.5 0.102 0.00305 1359.01 37.100968 3.10 18.9 0.01 0.03337 2.0534 1355.4 5.519 303.48178 56.7 7 1 0.000199 1.70 25.0 +0.41-0.01 0.00072 0.3373 32.0 0.084 0.00233 1359.02 104.820246 6.48 4.7 0.92 0.06967 1.6366 3843.6 4.487 307.83102 92.0 7 2 0.000436 3.55 6.2 +0.01-0.01 0.00192 0.2436 93.9 0.123 0.00176 1360.01 Kepler-290 c 36.770310 2.70 8.3 0.22 0.03326 4.0824 1382.2 4.278 97.29316 47.6 7 1 0.000183 1.39 10.1 +0.26-0.22 0.00103 0.9443 37.3 0.089 0.00271 1360.02 Kepler-290 b 14.589347 2.25 28.7 0.60 0.02773 5.1576 853.5 2.404 74.93413 34.4 7 1 0.000066 1.22 35.3 +0.34-0.38 0.00463 4.2873 34.3 0.083 0.00255 1363.01 Kepler-291 b 3.546511 2.16 542.7 0.33 0.01944 2.3284 440.5 2.266 67.90112 28.3 7 1 0.000016 0.94 560.3 +0.15-0.33 0.00069 0.7112 21.5 0.094 0.00274

– 102 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1363.02 Kepler-291 c 5.700786 1.88 283.8 0.57 0.01692 6.4226 316.6 1.647 65.68674 15.4 7 1 0.000055 0.82 292.9 +0.38-0.35 0.00105 4.5656 33.7 0.148 0.00483 1364.01 Kepler-292 f 20.834237 2.35 24.2 0.46 0.02603 1.6541 785.0 4.341 119.03249 24.4 7 1 0.000184 0.22 6.2 +0.07-0.41 0.00094 0.5885 41.4 0.160 0.00604 1364.02 Kepler-292 d 7.055679 2.23 104.1 0.35 0.02477 1.7194 731.0 3.145 114.90973 32.9 7 1 0.000043 0.21 26.4 +0.10-0.35 0.00079 0.4556 28.5 0.103 0.00369 1364.03 Kepler-292 e 11.979010 2.67 51.2 0.91 0.02956 0.1720 709.8 4.094 111.96640 27.8 7 1 0.000101 0.35 12.9 +0.00-0.64 0.00287 0.9013 33.9 0.122 0.00523 1364.04 Kepler-292 c 3.715335 1.47 237.7 0.38 0.01635 2.1182 315.1 2.320 102.79198 18.3 7 1 0.000033 0.15 60.2 +0.08-0.38 0.00082 0.7881 23.6 0.127 0.00513 1364.05 Kepler-292 b 2.580827 1.32 393.0 0.09 0.01468 2.4669 260.1 2.092 104.56214 16.9 7 1 0.000020 0.14 99.5 +0.38-0.09 0.00077 0.7495 21.3 0.132 0.00512 1366.01 Kepler-293 b 19.254196 3.07 44.9 0.50 0.02940 1.2667 985.1 4.533 97.78133 54.4 7 1 0.000079 1.30 44.9 +0.08-0.40 0.00215 0.6827 24.5 0.085 0.00245 1366.02 Kepler-293 c 54.155743 3.83 11.4 0.91 0.03670 0.5516 1093.8 4.608 105.36515 35.9 7 1 0.000466 1.63 11.3 +0.02-0.63 0.00337 3.1243 45.8 0.189 0.00521 1378.01 19.300773 1.51 49.0 0.48 0.01406 0.5888 227.0 5.829 66.36703 44.9 2 1 0.000136 0.34 26.9 +0.01-0.46 0.00038 0.1706 6.7 0.117 0.00451 1378.02 1.383325 0.65 1714.8 0.10 0.00609 1.4439 44.6 2.021 68.95654 20.3 0 1 0.000012 0.15 943.0 +0.36-0.10 0.00032 0.5612 4.1 0.186 0.00601 1396.01 Kepler-294 c 6.626400 2.71 206.7 0.14 0.02546 1.8332 781.6 3.175 116.98818 44.4 7 1 0.000028 1.27 228.2 +0.32-0.14 0.00070 0.3731 25.2 0.069 0.00227 1396.02 Kepler-294 b 3.701212 1.77 452.3 0.05 0.01665 2.1618 335.5 2.476 113.27593 22.6 7 1 0.000025 0.83 499.2 +0.40-0.05 0.00070 0.5337 21.2 0.116 0.00355 1408.01 14.534139 1.22 9.4 0.36 0.02013 3.0812 500.7 3.262 78.42491 37.2 7 1 0.000071 0.06 1.6 +0.10-0.36 0.00073 0.8065 19.4 0.085 0.00294 1408.02 82.371190 17.23 0.9 1.26 0.28539 7.5269 469.3 1.139 141.17686 1.2 -1 2 0.001512 16.77 0.2 +0.30-0.34 0.27756 7.8984 132.8 0.598 0.01095 1413.01 Kepler-295 b 12.645164 1.22 72.6 0.02 0.01242 0.1738 186.5 8.613 71.62536 39.9 7 1 0.000181 0.64 90.2 +0.42-0.02 0.00039 0.0341 8.3 0.234 0.00812 1413.02 Kepler-295 c 21.526258 1.17 35.3 0.05 0.01192 0.3385 172.7 8.213 65.28720 23.3 7 1 0.000336 0.62 43.9 +0.45-0.05 0.00053 0.0893 10.0 0.253 0.00960 1413.03 Kepler-295 d 33.884054 1.36 19.3 0.50 0.01384 1.2732 222.1 5.373 93.00625 17.2 7 1 0.000685 0.72 24.0 +0.00-0.46 0.00069 0.5559 17.7 0.411 0.00919

– 103 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1422.01 Kepler-296 c 5.841648 2.15^∗ 31.0 0.54 0.03531 5.1107 1400.5 1.887 68.92127 50.7 7 1 0.000015 0.10 5.3 +0.02-0.51 0.00092 2.1243 44.3 0.059 0.00141 1422.02 Kepler-296 d 19.850242 2.28^∗ 6.1 0.65 0.03753 3.9051 1525.0 2.826 66.65098 38.0 7 1 0.000097 0.31 1.1 +0.27-0.42 0.00487 2.5317 57.4 0.102 0.00275 1422.03 Kepler-296 b 3.621457 0.94^∗ 59.5 0.00 0.01546 6.1965 280.7 1.729 67.75360 22.6 7 1 0.000040 0.07 10.1 +0.43-0.00 0.00108 2.7982 35.2 0.187 0.00506 1422.04 Kepler-296 f 63.335879 1.79^∗ 1.3 0.27 0.02951 9.9318 1022.5 3.755 95.61161 16.1 7 1 0.001292 0.11 0.2 +0.17-0.26 0.00148 3.6607 88.5 0.277 0.01043 1422.05 Kepler-296 e 34.142347 1.75^∗ 3.0 0.49 0.02880 2.8186 966.9 4.261 54.02752 17.2 7 1 0.003409 0.23 0.5 +0.00-0.49 0.00368 5.2095 234.8 0.654 0.07612 1426.01 Kepler-297 b 38.871826^{tt} 2.87 15.9 0.46 0.02876 1.1151 940.4 6.125 104.28713 45.9 7 1 0.000153 0.52 6.9 +0.03-0.43 0.00056 0.2850 17.8 0.087 0.00209 1426.02 Kepler-297 c 74.920137^{tt} 6.54 6.6 0.81 0.06543 1.9430 4150.1 4.794 58.03770 151.2 7 1 0.000120 1.18 2.9 +0.02-0.05 0.00104 0.4158 36.0 0.091 0.00098 1426.03 150.018303^{tt} 59.73 2.6 1.53 0.59798 1.5056 4437.6 4.400 157.68721 130.5 7 2 0.000302 26.26 1.1 +0.05-0.47 0.23973 0.1367 58.0 0.059 0.00103 1430.01 Kepler-298 b 10.475464 1.96 18.8 0.42 0.03077 5.8863 1138.1 2.320 85.64156 44.4 7 1 0.000027 0.10 3.4 +0.05-0.41 0.00096 1.5875 35.3 0.056 0.00150 1430.02 Kepler-298 c 22.928810 1.93 6.5 0.59 0.03039 8.5099 1084.0 2.398 256.03372 22.6 7 1 0.000380 0.22 1.1 +0.02-0.53 0.00327 6.6079 181.1 0.434 0.01134 1430.03 Kepler-298 d 77.473633 2.50 1.3 0.75 0.03935 2.8203 1559.4 4.433 117.24735 30.0 7 1 0.000615 0.20 0.2 +0.19-0.52 0.00270 4.0164 70.6 0.160 0.00490 1432.01 Kepler-299 c 6.885875 2.65 193.6 0.95 0.02355 0.0539 408.1 4.009 71.40955 32.7 7 1 0.000040 0.63 94.3 +0.01-0.66 0.00301 0.6299 16.9 0.107 0.00356 1432.02 Kepler-299 d 15.054786 1.86 68.1 0.52 0.01655 1.0899 309.0 4.279 77.58557 18.8 7 1 0.000189 0.38 33.2 +0.15-0.37 0.00072 0.5056 21.5 0.217 0.00804 1432.03 Kepler-299 b 2.927128 1.32 593.0 0.38 0.01169 1.2519 157.3 2.546 66.82858 17.9 7 1 0.000033 0.27 288.9 +0.07-0.38 0.00057 0.4819 13.5 0.166 0.00650 1432.04 Kepler-299 e 38.285489 1.87 19.6 0.22 0.01660 1.7636 327.7 5.638 76.30747 15.0 7 1 0.001428 0.39 9.6 +0.23-0.22 0.00090 0.5346 28.9 0.420 0.02483 1435.01 Kepler-300 c 40.714955 2.25 17.3 0.70 0.02286 0.2138 547.6 8.692 79.56443 59.6 7 1 0.000245 1.04 18.6 +0.10-0.48 0.00198 0.2231 12.6 0.140 0.00343 1435.02 Kepler-300 b 10.446347 1.67 105.3 0.33 0.01697 7.4767 336.4 2.190 66.27803 35.7 7 1 0.000043 0.76 113.6 +0.13-0.33 0.00049 2.0147 14.6 0.091 0.00225

– 104 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1436.01 Kepler-301 b 2.508553 1.35 639.6 0.09 0.01370 1.8168 227.2 2.294 68.01010 33.2 7 1 0.000012 0.72 801.8 +0.33-0.09 0.00040 0.3720 9.3 0.073 0.00232 1436.02 Kepler-301 d 13.751243 1.75 66.1 0.27 0.01780 1.7648 376.9 3.958 77.61227 33.7 7 1 0.000081 0.94 82.8 +0.19-0.27 0.00054 0.4131 15.5 0.096 0.00347 1436.03 Kepler-301 c 5.419026 1.35 230.2 0.11 0.01377 3.9497 225.8 2.281 64.64467 24.8 7 1 0.000032 0.72 288.6 +0.35-0.11 0.00055 1.0934 13.1 0.099 0.00371 1445.01 7.168925 1.69 513.8 0.66 0.01007 0.2810 107.7 4.584 68.67822 44.3 7 1 0.000050 0.36 235.8 +0.00-0.51 0.00084 0.1752 3.9 0.100 0.00397 1445.02 54.329759 1.34 34.0 0.70 0.00803 0.0391 67.8 16.589 76.30895 8.3 2 1 0.007045 0.29 15.6 +0.01-0.53 0.00075 0.1552 17.4 2.144 0.07505 1445.03 20.027461 0.89 128.4 0.16 0.00532 0.0012 24.0 52.384 83.05865 12.5 2 1 0.003965 0.18 59.0 +0.12-0.16 0.00030 0.0002 3.5 4.755 0.09436 1447.01 40.246413 57.36 16.8 0.87 0.52543 2.8768 160397.4 6.146 94.30597 565.6 0 0 0.000022 4.62 0.0 +0.07-0.06 0.04233 0.0762 1111.4 0.052 0.00037 1447.02 2.279997 13.50 754.9 0.82 0.12370 0.0392 10333.8 6.718 66.64045 407.5 0 2 0.000002 0.08 0.0 +0.01-0.01 0.00069 0.0016 71.5 0.071 0.00065 1475.01 1.609315 1.31 134.3 0.13 0.02313 3.6918 684.6 1.570 111.94289 40.8 2 1 0.000005 0.08 34.0 +0.33-0.13 0.00088 0.8530 27.2 0.055 0.00187 1475.02 9.512181 1.68 12.5 0.36 0.02968 2.9432 1090.6 2.904 118.47913 36.6 7 1 0.000051 0.11 3.1 +0.09-0.36 0.00107 0.8109 45.0 0.097 0.00335 1480.01 20.381655 2.62 15.7 0.10 0.03484 3.3500 1527.5 3.827 75.31644 48.9 7 1 0.000088 1.01 15.0 +0.30-0.10 0.00084 0.5474 42.1 0.071 0.00263 1480.02 7.004454 1.14 65.6 0.69 0.01515 1.4682 241.2 2.552 70.90500 12.1 2 1 0.000094 0.50 63.0 +0.06-0.49 0.00328 1.4328 30.5 0.212 0.00828 1486.01 Kepler-302 c 127.282184 12.45 5.7 0.83 0.09347 1.0455 8160.7 7.160 96.88937 156.2 7 1 0.000427 2.54 2.8 +0.01-0.01 0.00096 0.0932 83.9 0.096 0.00213 1486.02 Kepler-302 b 30.184104 4.06 38.8 0.73 0.03052 0.4753 964.6 5.940 79.64006 40.8 7 1 0.000203 0.85 18.9 +0.13-0.50 0.00127 0.3967 34.2 0.116 0.00373 1515.01 Kepler-303 b 1.937055 0.89 88.4 0.45 0.01679 3.4298 333.6 1.535 67.71867 49.9 7 1 0.000004 0.05 22.7 +0.07-0.38 0.00048 0.9073 9.8 0.041 0.00124 1515.02 Kepler-303 c 7.061149 1.14 15.7 0.68 0.02154 22.4561 477.4 1.054 69.27187 33.2 7 1 0.000019 0.09 4.0 +0.13-0.06 0.00132 5.5930 23.6 0.062 0.00152 1529.01 Kepler-59 c 17.976811^{tt} 1.73 74.9 0.44 0.01566 1.5870 272.2 4.188 80.75468 26.4 7 1 0.000115 0.86 86.2 +0.02-0.43 0.00047 0.4627 11.8 0.104 0.00378

– 105 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1529.02 Kepler-59 b 11.869455^{tt} 1.24 131.3 0.09 0.01120 0.8846 135.2 4.875 70.71391 16.0 7 1 0.000089 0.61 151.1 +0.35-0.09 0.00044 0.1903 9.0 0.115 0.00442 1557.01 Kepler-304 b 3.295709 2.86 139.1 0.42 0.03814 4.1388 1748.2 1.797 66.96482 159.4 7 1 0.000002 0.21 26.9 +0.01-0.37 0.00196 0.7221 14.6 0.016 0.00037 1557.02 Kepler-304 d 9.653471 2.75 33.1 0.75 0.03662 1.1401 1344.6 2.987 67.85589 91.3 7 1 0.000015 0.21 6.3 +0.01-0.52 0.00195 1.0350 18.8 0.033 0.00091 1557.03 Kepler-304 c 5.315946 2.17 72.6 0.49 0.02898 23.9535 966.3 1.114 65.42892 67.5 7 1 0.000007 0.15 14.0 +0.22-0.02 0.00121 5.1178 25.2 0.033 0.00085 1557.04 1.499103 1.04 400.0 0.20 0.01393 4.4482 241.1 1.413 66.06686 31.3 7 1 0.000004 0.07 77.1 +0.26-0.20 0.00054 1.1129 11.3 0.056 0.00159 1563.01 Kepler-305 b 5.487108 2.88 117.5 0.17 0.03327 2.3493 1336.4 2.754 289.07559 49.3 7 1 0.000021 0.20 24.1 +0.28-0.17 0.00086 0.4885 33.5 0.069 0.00176 1563.02 Kepler-305 c 8.290858 2.81 66.1 0.81 0.03240 0.6684 1006.1 3.033 292.63623 32.1 7 1 0.000056 0.30 13.6 +0.00-0.56 0.00283 1.1428 40.2 0.107 0.00322 1563.03 3.205386 1.90 238.6 0.78 0.02192 0.7670 465.3 2.160 287.63229 20.2 2 1 0.000032 0.25 48.9 +0.14-0.55 0.00249 1.4185 31.5 0.142 0.00448 1563.04 Kepler-305 d 16.738661 2.71 26.1 0.62 0.03129 5.3616 1067.5 2.460 292.41608 20.9 7 1 0.000145 0.41 5.3 +0.06-0.47 0.00426 3.1029 64.9 0.136 0.00358 1567.01 Kepler-306 c 7.240193 2.35 62.1 0.83 0.02999 0.4772 834.7 3.052 288.01328 50.4 7 1 0.000032 0.19 12.1 +0.04-0.56 0.00174 1.0078 22.9 0.069 0.00219 1567.02 Kepler-306 b 4.646186 1.52 111.5 0.07 0.01937 3.3254 451.9 2.316 287.59058 30.0 7 1 0.000025 0.10 21.8 +0.37-0.07 0.00064 0.7585 20.7 0.082 0.00257 1567.03 Kepler-306 d 17.326644 2.47 19.4 0.90 0.03145 0.1638 810.4 4.777 293.50885 38.9 7 1 0.000137 0.24 3.8 +0.03-0.62 0.00250 0.8477 28.5 0.104 0.00396 1567.04 Kepler-306 e 44.840975 2.27 5.4 0.31 0.02898 2.1660 999.8 5.484 292.87387 32.1 7 1 0.000439 0.15 1.1 +0.15-0.31 0.00097 0.5572 42.5 0.181 0.00446 1576.01 Kepler-307 b 10.415728 2.88 97.0 0.38 0.02624 3.8476 813.4 2.707 76.04582 82.7 7 1 0.000018 0.50 40.7 +0.08-0.38 0.00055 0.9098 13.0 0.037 0.00098 1576.02 Kepler-307 c 13.084194 2.86 71.9 0.74 0.02605 1.3370 692.9 3.103 65.63174 69.2 7 1 0.000033 0.51 30.2 +0.11-0.50 0.00125 1.2371 13.3 0.048 0.00134 1576.03 23.339144 0.96 32.8 0.18 0.00871 15.9267 91.2 2.294 79.34996 5.4 -1 1 0.003357 0.23 13.8 +0.47-0.13 0.00148 7.9035 24.3 0.617 0.04994 1589.01 Kepler-84 b 8.725818 2.47 229.3 0.35 0.01933 0.8479 436.1 4.246 71.76937 36.8 7 1 0.000045 0.47 108.8 +0.11-0.35 0.00053 0.2051 14.4 0.096 0.00301

– 106 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1589.02 Kepler-84 c 12.882779 2.76 136.2 0.80 0.02164 0.2895 453.2 4.559 68.19024 32.8 7 1 0.000091 0.59 64.6 +0.12-0.56 0.00219 0.5350 16.3 0.128 0.00474 1589.03 Kepler-84 e 27.434389 2.60 49.4 0.09 0.02039 1.8115 497.6 5.121 78.12540 25.0 7 1 0.000224 0.49 23.5 +0.35-0.08 0.00064 0.3630 21.3 0.131 0.00408 1589.04 Kepler-84 d 4.224537 1.38 598.4 0.02 0.01084 1.1583 140.0 3.172 68.43327 16.6 7 1 0.000042 0.27 283.8 +0.43-0.02 0.00055 0.2952 11.3 0.160 0.00594 1589.05 Kepler-84 f 44.552169 2.20 25.9 0.34 0.01722 1.6405 346.2 5.860 93.29097 18.2 7 1 0.000812 0.43 12.3 +0.12-0.34 0.00088 0.7586 29.5 0.412 0.01186 1590.01 12.890046 1.79 34.2 0.20 0.02087 2.3976 543.7 3.568 134.22734 36.5 7 1 0.000092 1.02 46.8 +0.27-0.20 0.00090 0.6400 30.1 0.133 0.00361 1590.02 2.355767 1.32 327.6 0.14 0.01542 5.1778 295.0 1.576 110.88486 17.4 2 1 0.000014 0.76 447.6 +0.32-0.14 0.00084 1.7748 23.2 0.120 0.00285 1593.01 Kepler-308 b 9.694928 2.12 118.2 0.30 0.02068 4.2628 498.8 2.609 115.45617 18.6 7 1 0.000090 1.02 134.1 +0.12-0.30 0.00095 1.2317 37.9 0.134 0.00558 1593.02 Kepler-308 c 15.382310 2.16 63.3 0.19 0.02106 2.1201 520.6 3.951 72.08277 18.4 7 1 0.000171 1.04 71.8 +0.23-0.19 0.00090 0.4995 36.2 0.157 0.00623 1596.01 Kepler-309 b 5.923653 1.56 65.9 0.81 0.01976 0.5621 361.4 2.787 67.68239 28.6 7 1 0.000028 0.14 12.9 +0.08-0.56 0.00135 1.0192 17.7 0.080 0.00245 1596.02 Kepler-309 c 105.356383 2.51 1.4 0.40 0.03183 15.6915 1235.2 3.658 71.68392 29.3 7 1 0.000857 0.18 0.2 +0.08-0.40 0.00140 4.9230 62.2 0.168 0.00345 1598.01 Kepler-310 c 56.475420 3.38 9.8 0.89 0.03533 0.3135 1073.9 6.133 76.81309 77.1 7 1 0.000207 1.58 10.8 +0.04-0.60 0.00238 1.0471 20.3 0.209 0.00221 1598.02 Kepler-310 d 92.876125 2.47 5.0 0.79 0.02582 0.6207 655.7 7.126 78.92567 41.0 7 1 0.000785 1.15 5.6 +0.06-0.54 0.00123 0.8381 21.4 0.169 0.00419 1598.03 Kepler-310 b 13.930698 1.19 62.9 0.21 0.01246 12.2537 184.7 2.104 67.42673 18.5 7 1 0.000108 0.56 69.3 +0.25-0.21 0.00068 4.0014 17.2 0.152 0.00470 1601.01 10.350743 1.52 87.6 0.77 0.01590 0.1042 255.4 6.240 66.71438 39.1 7 1 0.000087 0.71 95.5 +0.03-0.54 0.00145 0.1205 10.8 0.159 0.00485 1601.02 62.916373 1.87 7.9 0.24 0.01960 0.3671 462.8 11.210 84.71315 32.8 2 1 0.001132 0.86 8.7 +0.23-0.24 0.00061 0.0859 18.3 0.236 0.00746 1608.01 Kepler-311 b 9.176092 1.70 202.9 0.01 0.01308 0.9847 202.2 4.342 71.71740 37.9 7 1 0.000057 0.33 97.5 +0.40-0.01 0.00036 0.1923 8.2 0.110 0.00374 1608.02 Kepler-311 c 19.738286 1.43 73.0 0.42 0.01102 1.1315 139.5 4.860 66.28529 18.6 7 1 0.000205 0.28 35.1 +0.03-0.42 0.00049 0.3844 10.8 0.180 0.00650

– 107 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1627.01 10.296649 2.04 60.9 0.15 0.02383 4.7133 685.4 2.677 65.19965 33.0 2 1 0.000060 1.09 80.0 +0.29-0.15 0.00072 0.9969 27.7 0.083 0.00391 1627.02 5.939208 1.37 126.6 0.45 0.01596 3.4063 290.6 2.238 286.75378 18.2 2 1 0.000062 0.73 166.5 +0.00-0.44 0.00081 1.4056 23.5 0.125 0.00425 1628.01 Kepler-312 c 19.747412 3.15 115.0 0.18 0.01968 4.3792 455.8 3.376 80.10360 53.4 7 1 0.000068 0.61 52.2 +0.25-0.18 0.00043 0.8051 12.5 0.068 0.00191 1628.02 Kepler-312 b 1.772419 1.29 2802.4 0.36 0.00803 0.8604 74.6 2.453 65.08778 27.4 7 1 0.000012 0.25 1273.1 +0.10-0.36 0.00032 0.2626 4.7 0.111 0.00381 1639.01 125.043841 2.04 6.5 0.30 0.01673 0.4792 332.1 12.675 170.43990 5.8 -1 1 0.132959 0.99 7.2 +0.15-0.30 0.00117 0.2914 41.6 1.363 0.26774 1639.02 9.982528 1.18 190.2 0.78 0.00967 20.8505 91.3 1.026 66.44296 6.4 -1 1 0.000145 0.62 212.8 +0.17-0.11 0.00203 5.8670 21.7 0.311 0.00604 1647.01 Kepler-313 b 14.970418 2.53 145.4 0.02 0.01509 0.6575 274.7 5.858 67.50060 32.3 7 1 0.000114 0.31 41.0 +0.45-0.02 0.00096 0.1424 11.9 0.138 0.00429 1647.02 Kepler-313 c 32.273273 2.57 52.5 0.74 0.01535 0.3335 242.1 6.510 82.10331 16.4 7 1 0.000819 0.42 14.8 +0.00-0.54 0.00188 0.4687 19.2 0.385 0.01367 1647.03 6.330551 1.47 463.6 0.03 0.00878 1.2846 91.3 3.496 66.84902 11.1 2 1 0.000165 0.19 130.7 +0.41-0.03 0.00067 0.5238 12.0 0.364 0.01346 1692.01 Kepler-314 c 5.960392 2.90 165.0 0.75 0.02797 0.8455 793.0 2.765 70.26485 193.5 7 1 0.000005 0.43 59.5 +0.05-0.52 0.00108 0.8982 5.8 0.038 0.00051 1692.02 Kepler-314 b 2.461069 0.83 551.6 0.21 0.00798 1.6591 76.4 2.293 66.31441 29.2 7 1 0.000013 0.12 198.9 +0.22-0.21 0.00031 0.4044 4.1 0.085 0.00341 1707.01 Kepler-315 b 96.101141 3.77 6.7 0.74 0.03334 0.5278 1135.2 8.360 120.73232 37.3 7 1 0.000918 0.78 3.2 +0.02-0.52 0.00224 0.4845 41.1 0.140 0.00518 1707.02 Kepler-315 c 265.469335 4.15 1.7 0.94 0.03670 0.1644 998.4 10.184 84.06838 21.3 7 1 0.006223 0.96 0.8 +0.02-0.64 0.00462 2.0907 63.8 0.597 0.01006 1713.01 Kepler-316 c 6.827766 1.16 22.5 0.18 0.02039 4.1295 531.5 2.419 71.61401 33.4 7 1 0.000034 0.12 8.8 +0.26-0.18 0.00071 0.9410 102.4 0.510 0.00268 1713.02 Kepler-316 b 2.240508 1.06 103.7 0.14 0.01871 7.2591 440.9 1.390 70.82156 35.2 7 1 0.000006 0.11 41.0 +0.32-0.14 0.00068 1.7814 18.3 0.056 0.00164 1731.01 2.594894 1.88 252.0 0.29 0.02160 3.6594 549.7 1.782 65.75355 15.8 2 1 0.000016 1.22 407.5 +0.17-0.29 0.00117 1.4177 43.9 0.139 0.00387 1731.02 0.837913 31.34 1138.1 1.34 0.35973 0.0815 600.4 3.060 64.98746 30.4 0 0 0.000004 33.93 1839.9 +0.28-0.37 0.31200 0.0469 29.9 0.181 0.00293

– 108 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1737.01 1.732333 1.22 1267.9 0.03 0.01162 1.4035 160.9 2.219 65.79770 43.5 2 1 0.000006 0.60 1461.7 +0.42-0.03 0.00031 0.2992 6.0 0.061 0.00208 1737.02 13.540481 2.06 82.1 0.18 0.01958 1.2773 456.3 4.491 77.59900 56.3 2 1 0.000049 1.01 94.6 +0.26-0.18 0.00042 0.2515 10.4 0.069 0.00224 1737.03 7.025759 1.26 200.1 0.01 0.01197 6.7227 171.1 2.091 66.62759 22.1 7 1 0.000042 0.62 230.7 +0.46-0.01 0.00054 1.9072 11.4 0.106 0.00381 1747.01 20.558502 94.53 33.4 1.96 0.97622 1.0070 579.3 1.559 66.00526 26.1 7 0 0.000104 51.14 30.6 +0.02-0.76 0.38128 0.4441 45.2 0.143 0.00258 1747.02 0.567342 0.58 4269.9 0.10 0.00604 0.7645 25.0 1.908 64.78709 13.4 1 1 0.000006 0.22 3909.6 +0.36-0.10 0.00044 0.4088 6.4 0.303 0.00822 1750.01 7.768596 1.44 158.4 0.72 0.01401 0.6061 204.1 3.430 71.05089 25.0 7 1 0.000078 0.68 172.9 +0.04-0.53 0.00167 0.7331 13.0 0.181 0.00608 1750.02 2.537385 0.92 687.6 0.36 0.00895 4.0892 92.7 1.640 65.34962 11.5 6 1 0.000032 0.43 750.8 +0.10-0.36 0.00067 2.1757 12.0 0.181 0.00753 1751.01 8.689320 3.24 103.1 0.10 0.03003 4.5747 1120.4 2.585 66.66112 89.2 7 1 0.000016 1.66 126.7 +0.30-0.10 0.00056 0.6971 18.2 0.046 0.00094 1751.02 20.995464 4.34 31.5 0.96 0.04022 0.3137 1049.6 3.296 65.09480 45.3 7 2 0.000097 3.06 38.7 +0.06-0.03 0.01942 0.3547 42.4 0.151 0.00223 1756.01 5.524246 2.13 199.5 0.23 0.02046 2.4438 512.6 2.655 68.61935 23.2 2 1 0.000029 0.89 200.7 +0.24-0.23 0.00085 0.6534 27.6 0.106 0.00332 1756.02 8.775015 1.73 107.7 0.26 0.01666 3.1293 338.0 2.820 66.71029 14.1 2 1 0.000111 0.73 108.5 +0.18-0.26 0.00104 1.0831 33.7 0.236 0.00702 1760.01 Kepler-317 b 5.524242 2.09 194.5 0.30 0.02037 2.2731 509.2 2.672 68.61931 23.2 7 1 0.000027 0.96 212.9 +0.17-0.30 0.00082 0.6345 26.8 0.108 0.00303 1760.02 Kepler-317 c 8.775010 1.72 105.0 0.38 0.01673 2.6785 335.7 2.857 66.70980 14.3 7 1 0.000113 0.79 115.0 +0.07-0.38 0.00097 0.9975 32.9 0.240 0.00707 1779.01 Kepler-318 b 4.662715 4.71 439.8 0.07 0.03631 2.1054 1587.1 2.746 67.08179 268.6 7 1 0.000003 0.83 187.2 +0.21-0.07 0.00026 0.2442 8.7 0.013 0.00034 1779.02 Kepler-318 c 11.815007 3.68 125.1 0.01 0.02832 6.4892 965.5 2.556 66.08965 107.2 7 1 0.000020 0.65 53.2 +0.39-0.01 0.00046 0.9733 14.6 0.039 0.00091 1781.01 7.834453^{tt} 3.35 49.8 0.61 0.04252 1.7196 2008.5 2.847 68.22104 270.3 2 1 0.000004 0.28 9.8 +0.13-0.30 0.00256 0.8815 9.0 0.042 0.00030 1781.02 3.005157^{tt} 1.91 183.4 0.50 0.02430 2.2460 690.1 2.004 70.10229 120.4 2 1 0.000003 0.12 36.2 +0.00-0.43 0.00057 1.0765 7.0 0.020 0.00054

– 109 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1781.03 58.021968^{tt} 2.52 3.5 0.04 0.03196 7.0401 1312.3 4.241 84.84050 87.7 2 1 0.000139 0.15 0.7 +0.36-0.03 0.00060 1.0018 19.2 0.051 0.00129 1783.01 134.478389^{tt} 10.88 7.1 0.93 0.07152 0.8355 4019.8 5.902 102.28102 177.2 7 2 0.000274 2.20 3.3 +0.01-0.00 0.00172 0.0594 50.6 0.069 0.00120 1783.02 284.043618^{tt} 7.01 2.6 0.88 0.04612 0.8458 1901.1 8.043 133.85004 73.6 7 2 0.001510 1.42 1.2 +0.01-0.05 0.00115 0.3549 32.7 0.241 0.00258 1792.01 88.406900 4.40 6.3 0.54 0.03882 0.2786 1721.9 12.303 109.27322 366.6 2 1 0.000101 0.27 0.9 +0.05-0.23 0.00082 0.0758 5.9 0.086 0.00075 1792.02 1.546237 0.71 1388.2 0.11 0.00629 0.0399 24.3 7.372 65.46320 1.0 -1 1 0.000010 0.05 212.1 +0.30-0.11 0.00018 0.0054 2.1 0.172 0.00446 1792.03 9.109640 1.17 130.7 0.55 0.01033 0.3226 122.2 5.265 66.06873 56.7 7 1 0.000036 0.12 19.9 +0.03-0.44 0.00084 0.1899 3.0 0.072 0.00242 1803.01 4.539301 2.06 114.0 0.74 0.02612 1.8677 688.5 1.949 66.95896 47.2 2 1 0.000006 0.22 22.2 +0.01-0.54 0.00236 1.6009 9.5 0.024 0.00089 1803.02 12.720468 1.12 28.5 0.09 0.01414 6.8803 251.7 2.523 73.35898 12.8 1 1 0.000084 0.08 5.5 +0.35-0.09 0.00056 1.7027 13.1 0.092 0.00442 1805.01 Kepler-319 c 6.941357 2.63 142.9 0.13 0.02664 10.7677 851.1 1.791 70.54285 129.4 7 1 0.000007 0.37 50.2 +0.29-0.13 0.00043 1.7447 10.3 0.029 0.00061 1805.02 Kepler-319 d 31.781925 2.29 18.7 0.55 0.02321 2.9697 604.2 3.863 67.86667 61.3 7 1 0.000105 0.35 6.5 +0.07-0.42 0.00161 1.7687 12.7 0.065 0.00205 1805.03 Kepler-319 b 4.362705 1.63 261.6 0.26 0.01651 3.3165 323.7 2.194 68.23073 66.2 7 1 0.000009 0.23 91.9 +0.18-0.26 0.00035 0.6898 7.2 0.041 0.00134 1806.01 2.404553 2.88 1376.2 0.97 0.02380 0.0070 397.5 7.337 64.67669 204.1 1 1 0.000007 1.35 1505.5 +0.00-0.00 0.00023 0.0002 5.4 0.104 0.00196 1806.02 Kepler-320 c 17.934937 1.37 93.4 0.22 0.01131 0.9990 149.1 5.260 71.21820 26.0 7 1 0.000281 0.64 102.2 +0.22-0.22 0.00051 0.2802 11.2 0.310 0.00801 1806.03 Kepler-320 b 8.371554 1.14 260.8 0.67 0.00943 0.4697 94.7 4.040 70.67704 20.1 7 1 0.000162 0.54 285.3 +0.11-0.47 0.00052 0.4136 9.5 0.390 0.01257 1809.01 Kepler-321 c 13.093921 2.32 114.5 0.01 0.01777 11.8857 383.2 2.140 77.52374 76.3 7 1 0.000024 0.45 52.5 +0.43-0.01 0.00037 2.0292 7.1 0.032 0.00109 1809.02 Kepler-321 b 4.915379 1.77 426.3 0.06 0.01356 2.1284 222.6 2.725 65.69543 82.5 7 1 0.000010 0.34 195.4 +0.42-0.06 0.00031 0.4525 3.9 0.036 0.00128 1820.01 Kepler-322 c 4.337234 1.67 229.7 0.23 0.01723 2.4188 358.6 2.454 65.84959 69.7 7 1 0.000009 0.18 66.9 +0.18-0.23 0.00036 0.4570 7.1 0.035 0.00123

– 110 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1820.02 Kepler-322 b 1.653888 1.01 819.5 0.38 0.01042 2.4776 126.6 1.672 65.19171 34.8 7 1 0.000006 0.11 238.8 +0.09-0.38 0.00035 0.7647 5.5 0.065 0.00236 1824.01 Kepler-323 c 3.553822 1.63 754.1 0.10 0.01270 1.0875 190.0 3.050 67.64078 82.0 7 1 0.000008 0.32 371.4 +0.33-0.10 0.00022 0.1809 3.4 0.037 0.00133 1824.02 Kepler-323 b 1.678327 1.43 2035.3 0.09 0.01113 1.1212 146.6 2.360 69.05307 83.9 7 1 0.000003 0.28 1002.5 +0.36-0.09 0.00020 0.1957 2.8 0.033 0.00109 1831.01 Kepler-324 c 51.805612 3.15 6.8 0.83 0.03437 0.3566 1087.4 6.589 116.00049 62.3 7 1 0.000314 0.33 1.6 +0.01-0.58 0.00214 0.6913 21.1 0.150 0.00291 1831.02 Kepler-324 b 4.385315 1.14 183.8 0.38 0.01241 2.0047 184.0 2.488 72.22656 28.3 7 1 0.000025 0.11 45.9 +0.10-0.38 0.00048 0.6530 10.2 0.103 0.00313 1831.03 34.206320 1.53 11.8 0.20 0.01670 1.6300 343.8 5.593 81.79955 14.8 2 1 0.000697 0.15 3.0 +0.26-0.20 0.00070 0.4505 18.6 0.214 0.00546 1831.04 13.979335 39.92 38.7 1.39 0.43529 15.9740 1441.4 0.716 59.34694 21.0 2 2 0.000107 27.73 9.7 +0.21-0.45 0.30003 6.6333 360.7 0.191 0.00270 1832.01 Kepler-325 b 4.544439 2.91 350.9 0.18 0.02661 7.3286 844.6 1.756 67.90010 67.0 7 1 0.000008 1.44 411.1 +0.22-0.18 0.00053 1.3094 18.6 0.038 0.00104 1832.02 Kepler-325 c 12.762172 2.54 89.4 0.40 0.02319 14.5100 624.9 1.838 76.73016 30.7 7 1 0.000064 1.26 104.8 +0.07-0.40 0.00087 5.0194 32.3 0.103 0.00342 1832.03 Kepler-325 d 38.715185 2.79 20.4 0.17 0.02549 8.1702 781.2 3.458 67.03090 28.9 7 1 0.000220 1.39 23.9 +0.28-0.17 0.00084 1.8431 34.3 0.114 0.00307 1835.01 Kepler-326 c 4.580358 1.40 149.9 0.26 0.01602 3.7484 317.2 2.142 67.07605 59.0 7 1 0.000010 0.10 31.4 +0.22-0.26 0.00047 0.9024 7.3 0.040 0.00134 1835.02 Kepler-326 b 2.248329 1.52 380.9 0.88 0.01743 0.2991 254.2 2.071 66.42421 67.8 7 1 0.000004 0.16 79.6 +0.01-0.61 0.00147 0.8744 5.4 0.032 0.00115 1835.03 Kepler-326 d 6.766888 1.21 89.5 0.22 0.01387 12.8021 238.6 1.631 69.61605 36.3 7 1 0.000023 0.09 18.7 +0.23-0.22 0.00050 3.3546 10.1 0.064 0.00219 1843.01 4.194487 1.34 32.4 0.30 0.02410 7.3029 679.2 1.657 67.13380 55.2 7 1 0.000008 0.11 15.2 +0.16-0.30 0.00050 1.8356 16.8 0.049 0.00105 1843.02 6.355816 0.70 18.9 0.25 0.01261 17.9846 187.3 1.411 70.50632 11.9 2 1 0.000076 0.07 8.9 +0.32-0.20 0.00086 6.2954 21.8 0.148 0.00595 1845.01 1.970349 3.22 1644.3 0.12 0.01767 3.5702 397.9 1.691 64.94764 65.9 7 1 0.000004 0.84 1150.7 +0.32-0.12 0.00052 0.6375 9.5 0.038 0.00119 1845.02 5.058209 26.24 455.5 1.11 0.14404 0.6620 726.5 1.189 68.70129 63.0 7 2 0.000007 50.95 318.8 +0.47-0.12 0.27716 0.1333 25.0 0.054 0.00084

– 111 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1858.01 116.331208 4.15 4.4 0.41 0.03785 2.1366 1881.2 6.919 106.68298 64.8 7 1 0.001041 1.79 4.5 +0.08-0.38 0.00122 0.5941 79.0 0.194 0.00431 1858.02 86.056206 1.58 6.6 0.32 0.01439 0.3464 222.7 12.302 133.97266 8.1 2 1 0.005878 0.69 6.8 +0.14-0.32 0.00105 0.2265 32.1 1.236 0.03219 1860.01 6.319425 2.37 227.8 0.14 0.02064 1.6693 516.6 3.211 65.22832 66.2 2 1 0.000017 0.44 101.8 +0.28-0.14 0.00037 0.2662 9.0 0.041 0.00181 1860.02 12.209459 2.23 94.6 0.08 0.01947 1.5351 459.9 4.130 293.32083 50.1 2 1 0.000074 0.42 42.2 +0.35-0.08 0.00044 0.2866 11.1 0.076 0.00251 1860.03 3.076443 1.46 608.4 0.06 0.01272 1.5723 195.4 2.579 286.76184 33.0 2 1 0.000013 0.28 271.9 +0.36-0.06 0.00036 0.2969 7.2 0.063 0.00189 1867.01 Kepler-327 b 2.549575 1.11 53.7 0.03 0.02063 4.9526 524.6 1.667 65.60488 50.7 7 1 0.000006 0.05 9.2 +0.41-0.03 0.00055 0.9885 14.8 0.044 0.00128 1867.02 Kepler-327 d 13.969457 1.73 5.6 0.71 0.03212 17.7575 1056.2 1.408 65.17104 46.0 7 1 0.000031 0.10 0.9 +0.08-0.10 0.00143 5.6607 38.8 0.059 0.00126 1867.03 Kepler-327 c 5.212333 1.03 20.4 0.22 0.01909 4.4973 446.2 2.129 65.70664 35.4 7 1 0.000019 0.05 3.5 +0.22-0.22 0.00061 1.0509 17.4 0.066 0.00219 1871.01 92.727556 2.14 1.3 0.37 0.02960 2.7760 1087.4 6.296 110.44847 40.6 2 1 0.000602 0.13 0.2 +0.07-0.37 0.00087 0.6145 31.6 0.111 0.00320 1871.02 32.376288 1.74 5.5 0.54 0.02416 2.6135 680.1 4.086 83.41022 38.8 2 1 0.000205 0.32 1.1 +0.00-0.51 0.00430 1.0604 25.0 0.119 0.00373 1873.01 Kepler-328 c 71.311250 5.05 12.3 0.20 0.04289 0.9399 2168.8 8.816 65.39258 50.5 7 2 0.000597 1.86 10.9 +0.18-0.20 0.00078 0.1443 53.8 0.129 0.00435 1873.02 Kepler-328 b 34.921172 2.50 32.0 0.20 0.02124 0.4522 528.5 8.687 90.59717 17.7 7 1 0.000785 0.93 28.3 +0.30-0.20 0.00103 0.1460 40.4 0.433 0.01416 1874.01 Kepler-329 c 18.684737 1.93 6.3 0.64 0.03372 1.3630 1244.5 3.948 69.14841 45.3 7 1 0.000089 0.29 2.5 +0.06-0.46 0.00388 0.7559 37.2 0.086 0.00273 1874.02 Kepler-329 b 7.416397 1.40 21.6 0.89 0.02453 0.8079 480.8 2.168 68.85335 22.0 7 1 0.000046 0.25 8.4 +0.02-0.61 0.00356 3.4558 33.8 0.098 0.00402 1884.01 23.117425^{tt} 3.73 21.7 0.02 0.04183 4.3912 2128.4 3.689 82.56020 29.5 2 0 0.000078 2.45 34.8 +0.39-0.02 0.00083 0.6847 42.5 0.058 0.00227 1884.02 4.775029^{tt} 1.88 177.8 0.01 0.02105 9.2927 536.9 1.665 288.45471 18.1 2 1 0.000023 1.24 285.3 +0.43-0.01 0.00078 2.1468 29.0 0.060 0.00232 1889.01 14.305012 3.41 55.6 0.96 0.03626 0.0509 912.2 5.239 68.07044 46.5 7 1 0.000086 1.70 60.6 +0.11-0.08 0.00717 0.1079 45.3 0.603 0.00354

– 112 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1889.02 9.181866 1.60 100.1 0.58 0.01703 1.0703 322.8 3.472 65.41034 18.3 7 1 0.000113 0.74 109.0 +0.04-0.47 0.00081 0.6676 25.3 0.264 0.00577 1891.01 Kepler-330 c 15.955387 1.95 23.8 0.22 0.02471 2.2444 761.3 3.917 76.30371 43.2 7 1 0.000076 0.72 22.0 +0.21-0.22 0.00073 0.4631 25.1 0.088 0.00291 1891.02 Kepler-330 b 8.259780 1.35 56.9 0.64 0.01718 1.2909 322.0 3.005 86.98309 20.8 7 1 0.000076 0.53 52.5 +0.05-0.48 0.00233 0.8474 24.3 0.201 0.00660 1895.01 Kepler-331 b 8.457496 1.82 18.3 0.48 0.03397 4.5087 1377.2 2.304 66.86954 43.3 7 1 0.000024 0.19 7.0 +0.01-0.48 0.00121 1.5442 43.6 0.071 0.00185 1895.02 Kepler-331 c 17.281110 1.84 7.0 0.08 0.03423 7.5068 1521.2 2.772 69.00798 37.7 7 1 0.000064 0.19 2.7 +0.36-0.08 0.00112 1.5235 52.0 0.071 0.00216 1895.03 Kepler-331 d 32.134328 1.64 3.1 0.29 0.03059 11.7335 1188.5 2.815 75.26823 22.6 7 1 0.000216 0.17 1.1 +0.18-0.29 0.00144 3.5244 83.6 0.131 0.00375 1899.01 19.761812 2.56 93.2 0.80 0.01945 0.8513 371.8 3.681 68.17486 38.3 7 1 0.000107 1.28 106.5 +0.02-0.57 0.00193 1.3291 14.2 0.093 0.00304 1899.02 10.522520 1.03 213.9 0.29 0.00780 1.1122 69.5 4.153 73.07053 9.8 2 1 0.000251 0.51 244.6 +0.15-0.29 0.00065 0.4847 10.1 0.396 0.01652 1905.01 Kepler-332 b 7.626324 1.17 57.1 0.13 0.01489 4.9337 278.1 2.370 69.01672 41.8 7 1 0.000028 0.08 11.2 +0.32-0.13 0.00049 1.0780 10.0 0.073 0.00221 1905.02 Kepler-332 c 15.995622 1.09 21.5 0.08 0.01383 3.6096 242.2 3.379 77.23834 28.3 7 1 0.000108 0.08 4.2 +0.36-0.08 0.00056 0.8422 11.9 0.127 0.00423 1905.03 Kepler-332 d 34.211540 1.18 7.8 0.51 0.01507 1.8670 264.2 4.709 87.57732 24.7 7 1 0.000326 0.08 1.5 +0.03-0.45 0.00059 0.6606 13.3 0.164 0.00584 1908.01 Kepler-333 b 12.551158 1.32 11.1 0.76 0.02267 1.0012 506.8 3.216 70.26142 42.7 7 1 0.000044 0.16 4.4 +0.03-0.53 0.00138 1.1233 16.8 0.070 0.00226 1908.02 Kepler-333 c 24.088210 1.11 4.6 0.74 0.01906 1.1172 364.0 3.990 67.42547 24.3 7 1 0.000207 0.20 1.8 +0.17-0.50 0.00274 1.4350 21.6 0.140 0.00501 1909.01 Kepler-334 c 12.758005 1.43 102.9 0.03 0.01226 1.6327 179.4 4.088 66.95790 51.8 7 1 0.000055 0.26 44.7 +0.41-0.03 0.00028 0.3154 4.6 0.071 0.00256 1909.02 Kepler-334 b 5.470319 1.12 316.5 0.11 0.00962 1.6631 109.6 3.041 64.49467 39.8 6 1 0.000021 0.21 137.6 +0.32-0.11 0.00025 0.3174 3.6 0.066 0.00211 1909.03 Kepler-334 d 25.098490 1.41 41.7 0.07 0.01212 10.2978 175.5 2.767 78.56945 32.3 7 1 0.000142 0.26 18.1 +0.37-0.07 0.00039 2.3750 7.9 0.101 0.00345 1915.01 Kepler-335 b 6.562331 3.39 652.4 0.83 0.01675 0.1692 265.4 4.035 65.60635 50.7 7 1 0.000031 0.67 298.4 +0.03-0.57 0.00102 0.3457 8.0 0.067 0.00278

– 113 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1915.02 Kepler-335 c 67.844469 3.07 29.0 0.77 0.01515 0.0925 229.7 12.157 82.49928 27.2 7 1 0.001423 0.66 13.2 +0.02-0.55 0.00152 0.1145 12.8 0.353 0.01285 1916.01 Kepler-336 d 20.678772 2.37 76.0 0.50 0.01668 1.3191 312.2 4.515 84.69139 46.4 7 1 0.000102 0.48 32.2 +0.42-0.29 0.00161 0.4060 8.9 0.087 0.00286 1916.02 Kepler-336 c 9.600001 2.10 213.0 0.05 0.01475 1.1048 259.2 4.243 69.58177 57.3 7 1 0.000035 0.37 90.2 +0.38-0.05 0.00033 0.1921 6.3 0.060 0.00196 1916.03 Kepler-336 b 2.024823 1.02 1655.8 0.06 0.00719 0.8370 57.7 2.762 65.35611 23.6 7 1 0.000017 0.19 701.5 +0.40-0.06 0.00032 0.2183 4.1 0.133 0.00475 1920.01 16.571128 1.97 33.9 0.11 0.02262 5.9937 623.5 2.906 66.90237 48.6 7 1 0.000055 0.94 38.6 +0.35-0.11 0.00060 1.1974 18.3 0.062 0.00216 1920.02 10.138684 0.83 64.8 0.10 0.00954 1.5756 108.9 3.805 70.71075 13.7 2 1 0.000197 0.40 73.8 +0.36-0.10 0.00065 0.7082 13.7 0.384 0.01094 1922.01 1.954523 1.95 1201.1 0.35 0.01828 1.7848 387.0 2.014 65.29592 45.5 7 1 0.000006 0.83 1213.7 +0.12-0.35 0.00049 0.4816 12.8 0.054 0.00169 1922.02 15.096212 1.29 77.5 0.47 0.01215 0.2198 161.8 7.462 72.47714 13.2 2 1 0.000575 0.55 78.3 +0.03-0.42 0.00068 0.1064 17.3 0.676 0.01982 1929.01 Kepler-337 c 9.693201 2.05 334.9 0.00 0.01065 0.5061 135.7 5.509 65.81150 47.4 7 1 0.000047 0.57 229.9 +0.41-0.00 0.00024 0.0824 4.0 0.079 0.00291 1929.02 Kepler-337 b 3.292781 1.54 1430.6 0.03 0.00802 0.2668 76.9 4.767 66.00966 44.0 7 1 0.000019 0.43 982.2 +0.45-0.03 0.00023 0.0567 2.7 0.097 0.00345 1930.01 Kepler-338 b 13.726976 2.44 242.2 0.14 0.01286 0.3020 195.5 7.288 71.74833 57.4 7 1 0.000059 0.13 35.5 +0.27-0.14 0.00026 0.0543 4.3 0.083 0.00247 1930.02 Kepler-338 c 24.310856 2.34 112.1 0.03 0.01236 0.3101 180.7 8.820 70.04147 43.2 7 1 0.000158 0.12 16.4 +0.42-0.03 0.00028 0.0549 5.1 0.118 0.00397 1930.03 Kepler-338 d 44.431014 3.00 50.2 0.79 0.01582 0.0824 246.6 10.624 76.54198 29.7 7 1 0.000368 0.28 7.4 +0.00-0.57 0.00126 0.1134 6.9 0.156 0.00480 1930.04 9.341418 1.50 400.4 0.07 0.00793 0.3793 74.1 5.963 65.38934 28.0 2 1 0.000088 0.09 58.8 +0.36-0.07 0.00028 0.0801 3.8 0.153 0.00568 1931.01 Kepler-339 b 4.977656 1.42 191.3 0.60 0.01623 1.3880 290.3 2.553 67.67151 39.4 7 1 0.000019 0.66 206.8 +0.32-0.39 0.00171 0.7059 9.7 0.069 0.00227 1931.02 Kepler-339 d 10.558345 1.17 69.9 0.25 0.01332 2.1246 212.0 3.410 69.34663 23.7 7 1 0.000081 0.53 75.6 +0.18-0.25 0.00047 0.5138 11.7 0.120 0.00450 1931.03 Kepler-339 c 6.988055 1.15 121.6 0.46 0.01316 1.3897 200.2 3.150 65.56110 26.9 7 1 0.000053 0.52 131.4 +0.12-0.37 0.00051 0.5201 10.5 0.130 0.00446

– 114 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1932.01 Kepler-340 c 22.824669 3.37 185.7 0.12 0.01671 0.6860 324.2 6.614 77.46616 17.7 7 1 0.000481 0.77 129.6 +0.34-0.12 0.00080 0.1715 25.1 0.338 0.00945 1932.02 Kepler-340 b 14.844387 2.53 327.6 0.31 0.01254 0.6329 182.4 5.626 76.58289 11.0 7 1 0.000473 0.60 228.7 +0.15-0.31 0.00090 0.7174 22.5 0.550 0.01595 1940.01 10.994660 1.60 14.1 0.43 0.02715 19.0550 884.8 1.577 70.35921 38.8 7 1 0.000033 0.19 5.8 +0.22-0.24 0.00122 4.5024 35.1 0.055 0.00165 1940.02 6.736427 0.70 26.8 0.75 0.01183 12.2711 134.8 1.128 69.44610 3.8 -1 1 0.000147 0.15 11.1 +0.21-0.32 0.00226 6.9480 37.2 0.367 0.01296 1944.01 12.184175 2.29 106.5 0.02 0.01924 8.1939 436.9 2.368 72.05482 46.8 7 1 0.000045 0.42 45.9 +0.44-0.02 0.00055 1.8688 15.8 0.070 0.00220 1944.02 8.360489 1.29 174.6 0.28 0.01084 0.2338 136.4 6.519 71.82642 29.7 1 1 0.000090 0.24 75.2 +0.16-0.28 0.00040 0.0568 7.7 0.190 0.00595 1945.01 62.138693 2.90 7.9 0.58 0.02827 4.2403 893.8 4.225 94.14597 38.3 7 1 0.000310 1.24 8.0 +0.02-0.48 0.00258 1.8056 30.1 0.103 0.00287 1945.02 17.117899 1.34 44.0 0.66 0.01305 22.2215 183.1 1.438 69.19730 7.7 2 1 0.000215 0.59 44.6 +0.25-0.09 0.00179 5.8641 33.0 0.247 0.00623 1952.01 Kepler-341 c 8.010410 1.70 191.6 0.21 0.01519 0.8840 273.2 4.216 68.31534 36.4 7 1 0.000049 0.86 227.6 +0.22-0.21 0.00044 0.1848 11.0 0.101 0.00366 1952.02 Kepler-341 d 27.666313 1.85 37.0 0.27 0.01659 0.9949 324.9 6.048 76.86829 27.5 7 1 0.000297 0.94 44.0 +0.20-0.27 0.00059 0.2681 16.8 0.207 0.00710 1952.03 Kepler-341 b 5.195528 1.18 340.6 0.15 0.01057 0.7921 136.9 3.816 65.73520 19.5 7 1 0.000053 0.62 404.5 +0.30-0.15 0.00140 0.2123 7.9 0.149 0.00557 1952.04 Kepler-341 e 42.473269 1.99 20.9 0.74 0.01778 0.3261 323.8 7.168 79.27815 22.8 7 1 0.000633 1.03 24.9 +0.06-0.52 0.00196 0.3611 18.8 0.248 0.00917 1955.01 Kepler-342 b 15.170318 2.25 172.1 0.01 0.01399 2.0607 229.5 4.016 65.66283 42.5 7 1 0.000059 0.40 71.7 +0.37-0.01 0.00027 0.3193 6.3 0.072 0.00243 1955.02 Kepler-342 d 39.459357 2.49 48.1 0.75 0.01548 0.1967 244.1 8.164 69.46152 46.4 4 1 0.000375 0.48 20.0 +0.00-0.55 0.00128 0.2102 7.3 0.135 0.00597 1955.03 1.644195 1.00 3352.6 0.28 0.00625 0.5823 44.6 2.814 64.75143 14.6 7 1 0.000010 0.18 1396.3 +0.16-0.28 0.00023 0.1446 2.7 0.100 0.00366 1955.04 Kepler-342 c 26.234138 1.96 82.4 0.12 0.01221 15.5406 174.4 2.435 74.99866 19.4 7 1 0.000163 0.35 34.3 +0.34-0.12 0.00047 4.1069 10.6 0.114 0.00377 1960.01 Kepler-343 b 8.968550 2.41 269.9 0.73 0.01540 0.3339 245.9 4.326 72.38991 42.8 7 1 0.000058 0.51 117.7 +0.01-0.52 0.00170 0.3107 8.9 0.112 0.00308

– 115 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

1960.02 Kepler-343 c 23.221820 2.02 74.9 0.00 0.01291 10.2526 198.2 2.708 84.06640 18.3 7 1 0.000234 0.38 32.7 +0.45-0.00 0.00062 2.9562 16.0 0.201 0.00529 1961.01 1.907807 0.95 636.1 0.26 0.01019 2.3507 124.5 1.857 64.64029 57.2 7 1 0.000004 0.09 166.2 +0.19-0.26 0.00026 0.5141 3.2 0.039 0.00123 1961.02 76.633250 0.80 4.7 0.56 0.00863 0.9200 84.5 7.469 76.24123 6.8 -1 1 0.003995 0.09 1.2 +0.36-0.36 0.00059 0.9178 10.0 1.120 0.03211 1970.01 Kepler-344 b 21.963945 2.61 40.5 0.29 0.02446 9.1741 713.6 2.676 66.03648 30.7 7 1 0.000108 1.22 44.8 +0.15-0.29 0.00084 2.2493 32.9 0.086 0.00287 1970.02 Kepler-344 c 125.596809 2.95 4.0 0.03 0.02770 2.6875 930.9 7.533 148.44167 25.8 7 1 0.001728 1.38 4.4 +0.42-0.03 0.00094 0.6099 46.1 0.201 0.00546 1977.01 Kepler-345 c 9.387427 1.20 24.1 0.20 0.01766 20.9214 398.0 1.555 70.38084 38.5 7 1 0.000028 0.07 4.4 +0.26-0.20 0.00069 4.6817 14.9 0.054 0.00171 1977.02 Kepler-345 b 7.415563 0.74 32.8 0.15 0.01083 8.1829 150.4 1.971 70.81508 22.0 7 1 0.000054 0.06 6.0 +0.33-0.15 0.00063 2.6114 11.5 0.125 0.00409 1978.01 Kepler-346 b 6.511127 2.66 245.2 0.32 0.02387 14.6994 662.3 1.509 64.70570 43.0 7 1 0.000017 1.24 269.8 +0.16-0.32 0.00071 4.1449 24.3 0.053 0.00166 1978.02 Kepler-346 c 23.851549 3.07 43.8 0.63 0.02750 8.0027 819.1 2.385 80.61656 34.7 7 1 0.000098 1.46 48.2 +0.02-0.49 0.00273 4.8269 35.0 0.082 0.00271 1992.01 Kepler-347 b 12.798360 1.97 102.6 0.71 0.01798 0.1734 336.7 6.244 66.64816 39.8 7 1 0.000106 0.94 111.8 +0.01-0.52 0.00206 0.1453 12.2 0.149 0.00481 1992.02 Kepler-347 c 27.320871 1.75 37.1 0.77 0.01597 1.0902 253.9 3.927 87.30618 16.1 7 1 0.000457 0.84 40.4 +0.06-0.53 0.00213 2.1158 23.6 0.278 0.00991 1992.03 85.521418 1.67 8.1 0.34 0.01522 1.0261 272.5 8.508 114.31953 9.8 2 1 0.003650 0.78 8.8 +0.11-0.34 0.00089 0.3282 27.1 0.562 0.02545 2007.01 15.378913 1.60 92.4 0.76 0.01354 0.4248 185.1 4.488 76.40518 36.6 0 1 0.000118 0.80 108.1 +0.05-0.53 0.00071 0.5337 7.4 0.129 0.00384 2007.02 21.128757 1.45 60.9 0.26 0.01227 3.4033 177.5 3.659 82.27380 25.9 7 1 0.000154 0.73 71.3 +0.19-0.26 0.00044 0.8529 9.1 0.116 0.00364 2011.01 Kepler-348 b 7.056770 1.52 416.6 0.05 0.01022 8.7960 123.6 1.909 65.53178 28.7 7 1 0.000031 0.29 182.1 +0.40-0.05 0.00036 2.3355 6.3 0.080 0.00236 2011.02 Kepler-348 c 17.265427 1.33 126.4 0.62 0.00899 0.5277 88.1 5.187 68.35658 18.9 7 1 0.000179 0.25 55.2 +0.06-0.48 0.00035 0.4702 5.1 0.158 0.00636 2022.01 Kepler-349 b 5.929778 1.90 229.1 0.48 0.01881 2.7511 403.1 2.364 68.49118 33.4 7 1 0.000020 0.72 208.8 +0.02-0.43 0.00048 0.8487 14.4 0.066 0.00193

– 116 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2022.02 Kepler-349 c 12.247629 1.96 87.8 0.15 0.01932 3.0037 443.6 3.278 71.21701 46.5 7 1 0.000063 0.74 80.0 +0.33-0.15 0.00059 0.7507 16.5 0.090 0.00304 2025.01 Kepler-350 c 17.848568 3.13 150.8 0.15 0.01868 0.8460 410.9 5.665 81.38793 49.5 7 1 0.000091 0.63 70.4 +0.25-0.15 0.00038 0.1527 10.3 0.081 0.00297 2025.02 Kepler-350 d 26.135910 2.77 91.1 0.11 0.01654 0.7830 323.3 6.623 64.62333 41.1 7 1 0.000193 0.56 42.5 +0.31-0.11 0.00042 0.1381 10.6 0.111 0.00417 2025.03 Kepler-350 b 11.189562 1.85 285.1 0.38 0.01104 0.5768 140.7 5.120 73.63108 22.6 7 1 0.000119 0.38 133.1 +0.10-0.38 0.00044 0.1787 8.1 0.173 0.00699 2028.01 Kepler-351 c 57.248090 3.19 8.0 0.21 0.03417 2.4160 1403.0 5.923 117.69417 35.3 7 1 0.000599 1.55 9.3 +0.22-0.21 0.00100 0.5075 54.1 0.151 0.00492 2028.02 Kepler-351 b 37.054919 3.06 14.5 0.86 0.03278 0.4334 982.6 5.122 133.20033 28.5 7 1 0.000484 1.55 16.6 +0.06-0.61 0.00473 1.2253 52.9 0.226 0.00698 2029.01 Kepler-352 c 16.332995 1.24 28.9 0.12 0.01459 14.7364 260.4 2.122 69.90648 34.2 7 1 0.000272 0.10 6.2 +0.32-0.12 0.00069 4.3940 18.3 0.121 0.00512 2029.02 Kepler-352 b 10.055370 0.86 55.8 0.26 0.01012 3.0454 126.7 2.963 106.23302 24.0 7 1 0.000194 0.08 11.9 +0.20-0.26 0.00060 1.0982 12.0 0.183 0.00547 2036.01 Kepler-353 c 8.410894 1.38 12.5 0.46 0.02514 4.7782 741.4 2.253 66.80505 30.6 7 1 0.000039 0.07 2.0 +0.06-0.42 0.00088 1.7304 33.5 0.089 0.00265 2036.02 Kepler-353 b 5.795278 0.89 20.3 0.27 0.01620 4.4186 323.3 2.184 69.78197 16.1 7 1 0.000055 0.06 3.4 +0.18-0.27 0.00090 1.8456 29.4 0.164 0.00569 2037.01 73.757752 4.43 5.2 0.49 0.04085 24.6196 1908.6 2.695 116.72279 52.3 2 0 0.000361 2.81 8.1 +0.22-0.02 0.00147 5.3341 60.2 0.075 0.00323 2037.02 5.477148 2.23 166.1 0.16 0.02058 16.4502 506.1 1.422 285.84961 33.7 2 1 0.000023 1.42 260.0 +0.30-0.16 0.00077 4.7439 25.1 0.067 0.00205 2037.03 8.562616 2.43 91.8 0.18 0.02244 24.4279 601.7 1.444 288.13660 30.7 2 1 0.000035 1.54 143.8 +0.39-0.18 0.00101 4.7189 30.7 0.064 0.00198 2038.01 Kepler-85 b 8.305738 1.84 102.4 0.66 0.01885 0.7200 378.6 3.592 72.72803 36.9 7 1 0.000050 0.34 37.6 +0.10-0.46 0.00208 0.4829 13.9 0.102 0.00328 2038.02 Kepler-85 c 12.512598 2.28 59.9 0.94 0.02341 0.0836 418.6 4.506 72.43988 37.1 7 1 0.000088 0.42 22.0 +0.00-0.66 0.00271 0.8247 16.2 0.112 0.00415 2038.03 Kepler-85 d 17.913230 1.20 36.9 0.00 0.01227 1.7087 181.1 4.510 68.53773 16.5 7 1 0.000266 0.19 13.6 +0.47-0.00 0.00075 0.5230 17.2 0.255 0.00950 2038.04 Kepler-85 e 25.216751 1.27 23.5 0.20 0.01307 3.0588 203.3 4.083 85.68815 13.0 7 1 0.000718 0.20 8.6 +0.25-0.20 0.00085 1.0736 22.5 0.455 0.01695

– 117 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2045.01 Kepler-354 b 5.476660 1.84 65.1 0.73 0.02499 1.1168 635.0 2.503 68.70204 34.1 7 1 0.000024 0.58 53.3 +0.02-0.54 0.00138 1.0543 25.9 0.086 0.00241 2045.02 Kepler-354 d 24.209842 1.24 8.9 0.16 0.01688 2.4717 368.6 4.373 74.47630 13.2 7 1 0.000403 0.40 7.3 +0.30-0.16 0.00133 1.9437 46.9 0.472 0.01256 2045.03 Kepler-354 c 16.934402 1.31 14.3 0.63 0.01779 1.7730 353.7 3.456 70.26772 13.2 7 1 0.000228 0.42 11.8 +0.01-0.51 0.00119 1.3265 35.2 0.248 0.00840 2048.01 6.179994 2.05 104.2 0.18 0.02355 5.6824 678.7 2.111 65.72175 36.0 7 1 0.000022 0.16 22.2 +0.29-0.18 0.00080 1.3985 27.3 0.065 0.00201 2048.02 99.675457 16.79 2.5 1.13 0.19251 13.6278 1789.8 1.453 152.33046 1.0 -1 0 0.000939 25.46 0.6 +0.45-0.20 0.29161 5.9059 176.6 0.181 0.00357 2051.01 Kepler-355 c 25.762294 2.71 46.4 0.26 0.02329 0.6657 647.5 6.816 80.70457 42.0 7 1 0.000267 1.22 51.0 +0.22-0.26 0.00073 0.1582 22.0 0.149 0.00714 2051.02 Kepler-355 b 11.031890 1.46 143.0 0.38 0.01251 0.6420 184.3 4.935 295.33820 16.5 7 1 0.000338 0.66 157.2 +0.07-0.38 0.00075 0.2487 18.8 0.459 0.01661 2053.01 Kepler-356 c 13.121632 1.81 170.6 0.16 0.01243 2.3225 182.4 3.626 66.39310 37.7 7 1 0.000088 0.33 73.7 +0.29-0.16 0.00038 0.5437 8.1 0.114 0.00407 2053.02 Kepler-356 b 4.612696 1.57 694.6 0.26 0.01076 1.3869 134.8 2.972 65.77463 40.8 7 1 0.000021 0.29 300.1 +0.20-0.26 0.00032 0.3286 5.3 0.084 0.00268 2073.01 Kepler-357 d 49.499875 3.43 6.6 0.91 0.03762 0.1807 1108.1 6.594 72.04946 31.6 7 1 0.000460 2.04 9.2 +0.04-0.63 0.00418 0.9111 44.3 0.179 0.00538 2073.02 Kepler-357 b 6.475434 1.84 100.9 0.27 0.02021 2.7931 505.6 2.651 70.57941 28.6 7 1 0.000034 1.08 140.4 +0.17-0.27 0.00076 0.6795 24.6 0.094 0.00323 2073.03 Kepler-357 c 16.858370 2.67 27.8 0.82 0.02933 4.2587 796.5 2.016 75.34264 24.7 7 1 0.000081 1.57 38.7 +0.11-0.57 0.00225 7.5309 43.2 0.087 0.00299 2080.01 Kepler-358 c 83.488369 2.85 6.8 0.25 0.02737 3.0796 897.0 6.088 121.53814 30.2 7 1 0.000830 1.43 8.0 +0.23-0.25 0.00089 0.8486 37.4 0.199 0.00504 2080.02 Kepler-358 b 34.060467 2.72 22.5 0.38 0.02616 16.7089 798.8 2.461 74.36327 27.0 7 1 0.000194 1.36 26.4 +0.10-0.38 0.00102 5.2352 42.2 0.104 0.00332 2086.01 Kepler-60 b 7.132848 1.70 358.5 0.74 0.01144 0.1920 132.9 4.685 68.99751 29.1 7 1 0.000102 0.43 210.4 +0.17-0.50 0.00108 0.3228 17.3 0.276 0.00794 2086.02 Kepler-60 c 8.918876 1.97 265.5 0.64 0.01326 0.4714 189.9 4.267 73.08082 33.6 7 1 0.000066 0.53 155.8 +0.01-0.49 0.00171 0.4352 8.4 0.151 0.00434 2086.03 Kepler-60 d 11.898887 1.56 181.5 0.38 0.01051 3.5592 127.0 2.853 66.33779 17.2 7 1 0.000196 0.38 106.5 +0.10-0.38 0.00061 1.8329 12.5 0.302 0.01024

– 118 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2092.01 Kepler-359 c 57.688020 4.30 17.1 0.06 0.03623 7.4801 1590.0 4.161 72.94136 32.0 7 1 0.000545 2.00 19.2 +0.38-0.06 0.00115 1.5745 67.6 0.135 0.00667 2092.02 Kepler-359 b 25.563222 3.53 50.8 0.21 0.02979 2.8053 1070.5 4.284 308.28439 34.9 7 1 0.000202 1.64 57.4 +0.24-0.21 0.00094 0.6767 44.2 0.128 0.00369 2092.03 Kepler-359 d 77.095691 4.01 11.6 0.92 0.03380 1.6065 912.8 3.476 135.67392 14.7 7 1 0.001453 1.91 13.2 +0.00-0.64 0.00378 8.1653 87.5 0.233 0.01213 2098.01 25.082396 1.95 86.2 0.37 0.01373 0.7248 216.3 6.271 67.13155 30.2 2 1 0.000243 0.93 95.8 +0.10-0.37 0.00047 0.2135 10.4 0.173 0.00561 2098.02 89.723832 2.21 15.8 0.09 0.01562 0.5937 288.3 10.969 96.14750 23.5 7 1 0.002436 1.05 17.6 +0.38-0.09 0.00053 0.1364 13.8 0.450 0.01369 2111.01 Kepler-360 b 3.289672 1.65 694.6 0.07 0.01431 2.3393 243.1 2.312 64.75603 33.8 7 1 0.000012 0.78 774.7 +0.40-0.07 0.00046 0.5125 10.3 0.068 0.00213 2111.02 Kepler-360 c 7.186434 2.10 239.1 0.19 0.01817 21.7862 390.8 1.406 69.62273 30.9 7 1 0.000029 1.00 266.6 +0.44-0.07 0.00078 5.0199 20.9 0.072 0.00263 2113.01 15.942716 2.67 35.2 0.09 0.02951 3.7462 1055.0 3.384 79.32383 35.3 7 1 0.000097 1.37 44.9 +0.32-0.09 0.00081 0.6903 37.8 0.080 0.00382 2113.02 12.330917 2.44 49.5 0.19 0.02697 3.7482 873.9 3.056 294.97330 30.5 2 1 0.000092 1.26 63.1 +0.23-0.19 0.00081 0.7750 35.9 0.088 0.00315 2135.01 Kepler-361 c 55.188023 2.52 26.0 0.05 0.01721 0.6338 349.3 9.167 113.75018 42.3 7 1 0.000655 0.48 11.6 +0.42-0.05 0.00045 0.1343 10.9 0.185 0.00573 2135.02 20.188710 1.43 99.9 0.12 0.00977 0.8943 112.6 5.769 75.19035 20.3 2 1 0.000324 0.28 44.7 +0.33-0.12 0.00046 0.2458 8.6 0.282 0.00847 2135.03 Kepler-361 b 8.486616 1.45 316.1 0.27 0.00989 0.4779 114.3 5.176 71.01734 18.6 7 1 0.000084 0.28 141.5 +0.18-0.27 0.00036 0.1152 6.0 0.151 0.00464 2147.01 Kepler-362 c 37.866281 1.45 12.2 0.32 0.01839 2.6564 398.3 4.769 67.35783 29.9 7 1 0.000298 0.61 12.4 +0.11-0.32 0.00060 0.6694 18.5 0.144 0.00452 2147.02 Kepler-362 b 10.327186 0.88 69.2 0.42 0.01111 11.5977 142.0 1.803 72.37930 12.0 7 1 0.000101 0.38 70.0 +0.05-0.42 0.00078 5.8342 17.1 0.190 0.00577 2148.01 Kepler-363 d 11.932125 2.05 168.7 0.68 0.01266 0.1655 170.5 6.350 75.10532 33.1 7 1 0.000093 0.40 64.9 +0.03-0.52 0.00150 0.1136 6.6 0.131 0.00443 2148.02 Kepler-363 c 7.542427 1.69 309.4 0.10 0.01044 0.5519 135.1 4.900 65.95422 25.5 7 1 0.000058 0.27 119.1 +0.34-0.10 0.00036 0.1189 6.2 0.143 0.00492 2148.03 Kepler-363 b 3.614568 1.16 838.2 0.06 0.00715 0.7927 62.1 3.401 67.69656 15.7 7 1 0.000053 0.19 322.7 +0.40-0.06 0.00040 0.3007 5.9 0.281 0.00852

– 119 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2150.01 18.507446 2.94 53.0 0.94 0.02801 0.0650 591.9 5.517 64.55878 29.2 7 1 0.000181 1.33 55.5 +0.00-0.69 0.00296 0.7400 29.9 0.184 0.00560 2150.02 44.704514 1.71 16.5 0.46 0.01627 0.6162 280.2 7.677 82.68639 11.7 2 1 0.002692 0.76 17.2 +0.03-0.44 0.00109 0.4738 38.0 0.947 0.02501 2153.01 Kepler-364 c 59.980627 2.15 21.1 0.27 0.01533 1.6645 271.1 6.582 109.15025 25.7 7 1 0.000879 0.42 10.0 +0.16-0.27 0.00052 0.3843 14.8 0.222 0.00697 2153.02 Kepler-364 b 25.745718 1.55 64.8 0.68 0.01109 0.2703 130.3 6.983 68.95058 19.6 7 1 0.000548 0.37 30.7 +0.00-0.53 0.00153 0.2987 9.9 0.264 0.01321 2159.01 7.596708 1.23 213.3 0.06 0.00994 1.5250 118.7 3.507 64.95080 29.8 7 1 0.000043 0.25 100.2 +0.39-0.06 0.00033 0.3324 5.5 0.103 0.00368 2159.02 2.392645 1.08 1005.8 0.37 0.00868 5.8328 88.4 1.421 66.78612 25.6 0 1 0.000012 0.22 472.3 +0.09-0.37 0.00036 2.1931 5.5 0.086 0.00303 2160.01 17.670240 1.54 38.8 0.36 0.01762 0.5861 364.1 6.021 64.59441 29.0 7 1 0.000199 0.56 34.1 +0.09-0.36 0.00063 0.1729 18.7 0.197 0.00684 2160.02 15.407613 1.50 47.2 0.21 0.01707 1.7560 352.1 4.160 66.94610 4.9 -1 1 0.001591 0.58 41.5 +0.29-0.21 0.00243 4.5837 118.7 1.232 0.02181 2163.01 Kepler-365 b 10.664903 2.04 133.7 0.87 0.01787 0.3786 286.4 3.293 65.00994 27.4 7 1 0.000069 0.97 146.8 +0.04-0.62 0.00161 1.1545 15.6 0.129 0.00403 2163.02 Kepler-365 c 17.784129 1.64 68.4 0.22 0.01436 2.5216 244.8 3.862 79.90524 18.6 7 1 0.000215 0.77 75.1 +0.22-0.22 0.00064 0.6489 17.0 0.183 0.00770 2167.01 24.340002 2.84 54.6 0.14 0.02476 5.7178 744.0 3.351 69.05272 30.7 7 1 0.000237 1.63 74.8 +0.30-0.14 0.00084 1.4008 35.4 0.127 0.00679 2167.02 6.958159 1.05 290.4 0.44 0.00913 0.2716 85.7 5.471 291.97488 8.1 2 1 0.000694 0.61 398.1 +0.05-0.41 0.00094 0.4103 20.2 0.964 0.03113 2168.01 Kepler-366 b 3.281959 1.46 721.4 0.33 0.01276 1.0627 189.6 2.851 65.41897 27.2 7 1 0.000022 0.66 762.9 +0.16-0.33 0.00047 0.3143 10.9 0.115 0.00370 2168.02 Kepler-366 c 12.516160 1.79 120.7 0.20 0.01562 0.9225 286.5 4.838 68.02860 26.5 7 1 0.000095 0.81 127.7 +0.24-0.20 0.00054 0.2215 14.6 0.148 0.00550 2169.01 5.452958 0.88 183.9 0.10 0.00865 4.8090 91.2 2.132 67.15308 33.4 2 1 0.000022 0.12 63.2 +0.34-0.10 0.00028 1.1011 3.7 0.071 0.00234 2169.02 3.266592 0.67 375.3 0.23 0.00659 2.7626 52.2 2.113 69.08744 26.5 2 1 0.000019 0.09 129.1 +0.20-0.23 0.00025 0.7374 3.0 0.098 0.00318 2169.03 4.272297 0.67 254.5 0.08 0.00655 3.3534 52.2 2.216 66.21622 21.4 7 1 0.000025 0.09 87.6 +0.36-0.08 0.00028 0.8313 3.1 0.099 0.00362

– 120 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2169.04 2.192553 0.47 646.4 0.66 0.00466 1.1456 23.3 1.920 65.23769 12.1 2 1 0.000021 0.12 222.3 +0.06-0.47 0.00106 1.3901 2.6 0.170 0.00609 2173.01 Kepler-367 b 37.815724 1.30 5.3 0.90 0.01715 0.3537 235.0 4.631 74.09798 29.4 7 1 0.000279 0.16 1.1 +0.00-0.62 0.00193 1.4296 10.4 0.100 0.00455 2173.02 Kepler-367 c 53.578637 1.20 3.3 0.75 0.01582 1.0268 250.8 5.236 104.18362 30.2 7 1 0.000382 0.16 0.6 +0.04-0.54 0.00192 1.1208 10.9 0.128 0.00434 2174.01 6.693268 1.54 32.7 0.63 0.02381 4.8910 619.9 1.833 70.70434 23.5 2 1 0.000032 0.31 13.4 +0.31-0.42 0.00407 4.6578 33.2 0.089 0.00288 2174.02 33.136459 1.38 3.8 0.01 0.02143 4.8140 592.8 3.955 102.50484 16.5 7 1 0.000439 0.17 1.6 +0.47-0.01 0.00121 1.4057 47.1 0.207 0.00661 2174.03 7.725169 1.00 27.0 0.49 0.01543 10.1587 287.3 1.658 109.79509 10.1 2 1 0.000112 0.15 11.1 +0.12-0.44 0.00154 6.6320 43.0 0.235 0.00786 2175.01 Kepler-368 b 26.847680 3.26 96.6 0.28 0.01481 0.2045 259.0 10.085 75.16776 44.5 7 1 0.000326 0.91 69.6 +0.16-0.28 0.00043 0.0445 9.2 0.177 0.00668 2175.02 Kepler-368 c 72.379334 3.88 25.8 0.46 0.01762 1.0128 360.3 7.685 112.53420 35.0 7 1 0.001370 1.08 18.5 +0.01-0.44 0.00060 0.2834 16.7 0.197 0.01270 2179.01 Kepler-369 c 14.871572 1.41 3.7 0.01 0.02750 9.5151 916.4 2.427 70.69114 28.9 7 1 0.000083 0.06 0.6 +0.43-0.01 0.00088 2.1664 41.1 0.083 0.00367 2179.02 Kepler-369 b 2.732756 1.13 36.7 0.27 0.02188 19.7712 562.7 1.037 287.09555 32.0 7 1 0.000009 0.06 6.3 +0.24-0.26 0.00092 5.0381 29.6 0.047 0.00151 2183.01 Kepler-370 c 19.022930 1.91 43.4 0.35 0.01944 3.5299 444.4 3.418 72.66161 25.1 7 1 0.000177 0.89 47.6 +0.13-0.35 0.00077 1.2143 26.2 0.155 0.00540 2183.02 Kepler-370 b 4.579530 1.59 291.6 0.91 0.01623 0.1089 215.9 3.282 68.09728 22.4 7 1 0.000041 0.78 319.9 +0.04-0.65 0.00253 0.6251 15.5 0.168 0.00564 2188.01 2.696263 1.46 771.5 0.81 0.01418 0.1034 194.4 3.780 66.00889 24.8 1 1 0.000045 0.89 1071.8 +0.13-0.56 0.00158 0.2533 14.6 0.271 0.01108 2188.02 6.744892 1.78 227.4 0.51 0.01722 1.8754 343.9 4.168 -1096.45471 5.9 -1 1 6.893148 1.19 315.9 +0.09-0.46 0.00499 5.4740 115.2 1.104 478.12875 2194.01 Kepler-371 b 34.763278 1.89 22.7 0.62 0.01744 2.1469 330.3 4.174 94.73489 27.3 7 1 0.000351 0.52 13.9 +0.30-0.41 0.00204 1.9438 17.4 0.158 0.00644 2194.02 Kepler-371 c 67.968015 1.78 9.3 0.10 0.01645 1.2511 323.2 7.802 96.56290 27.0 7 1 0.001070 0.45 5.7 +0.36-0.10 0.00061 0.2859 16.7 0.206 0.00949 2195.01 Kepler-372 c 20.053763 2.09 87.6 0.23 0.01684 0.7501 329.5 6.031 69.58035 29.2 7 1 0.000190 0.90 88.3 +0.21-0.23 0.00052 0.1686 14.9 0.187 0.00595

– 121 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2195.02 Kepler-372 d 30.092568 1.69 51.4 0.30 0.01363 0.5484 216.8 7.499 82.03083 17.1 7 1 0.000680 0.73 51.8 +0.13-0.30 0.00065 0.1959 17.9 0.468 0.01474 2195.03 Kepler-372 b 6.849692 1.36 369.2 0.20 0.01099 0.8063 140.6 4.120 67.68069 18.6 7 1 0.000134 0.59 372.5 +0.23-0.20 0.00048 0.2095 11.3 0.259 0.01274 2218.01 Kepler-373 b 5.535309 1.36 199.1 0.16 0.01476 2.0087 245.9 2.864 65.76048 29.1 7 1 0.000029 0.67 232.6 +0.31-0.15 0.00055 0.4732 14.1 0.134 0.00318 2218.02 Kepler-373 c 16.725948 1.24 45.1 0.48 0.01345 4.2279 177.2 2.875 76.74868 11.9 7 1 0.000227 0.62 52.8 +0.44-0.27 0.00085 2.4992 22.8 0.251 0.00671 2220.01 Kepler-374 c 3.282807 1.10 537.4 0.29 0.01108 0.7009 141.6 3.309 64.89972 25.2 7 1 0.000020 0.57 654.5 +0.16-0.29 0.00040 0.1728 7.6 0.115 0.00375 2220.02 Kepler-374 d 5.028219 1.31 302.3 0.69 0.01313 0.4320 181.5 3.440 67.10741 26.0 7 1 0.000040 0.70 368.1 +0.02-0.51 0.00161 0.4682 9.4 0.129 0.00447 2220.03 Kepler-374 b 1.897806 1.03 1127.1 0.05 0.01033 0.9079 126.7 2.641 65.67854 28.8 7 1 0.000011 0.54 1372.7 +0.42-0.05 0.00037 0.2324 6.8 0.105 0.00407 2224.01 3.730866 1.21 374.7 0.32 0.01242 1.3933 181.3 2.723 65.89274 24.1 7 1 0.000030 0.56 410.4 +0.15-0.32 0.00056 0.4390 12.1 0.132 0.00501 2224.02 86.126613 1.48 5.7 0.33 0.01517 0.9069 272.4 8.925 133.96593 3.2 -1 1 0.046221 0.69 6.2 +0.11-0.33 0.00116 0.5055 37.0 2.053 0.05905 2236.01 Kepler-375 c 19.986326 2.65 36.3 0.93 0.02901 0.2649 646.7 3.810 68.52342 24.2 7 1 0.000184 0.96 31.1 +0.02-0.64 0.00295 2.2695 38.0 0.137 0.00545 2236.02 Kepler-375 b 12.125934 1.45 70.8 0.32 0.01592 3.2649 298.2 3.040 75.10445 14.5 7 1 0.000204 0.51 60.5 +0.13-0.32 0.00105 1.6841 33.2 0.280 0.00691 2248.01 2.818144 1.48 296.0 0.49 0.01694 3.2851 328.1 1.727 65.25129 28.4 7 1 0.000012 0.13 69.2 +0.09-0.41 0.00070 1.2996 17.1 0.075 0.00257 2248.02 9.490880 1.14 58.8 0.20 0.01305 3.8884 208.2 2.723 64.52586 8.4 2 1 0.000128 0.12 13.8 +0.28-0.20 0.00096 1.4804 26.3 0.357 0.00871 2248.03 0.761949 1.03 1801.3 0.00 0.01183 3.0199 172.3 1.313 65.78526 24.8 7 1 0.000003 0.09 420.9 +0.46-0.00 0.00053 0.8521 11.0 0.080 0.00233 2248.04 2.646218 1.05 330.8 0.34 0.01204 5.2551 174.0 1.547 65.66882 12.6 2 1 0.000021 0.11 77.3 +0.26-0.26 0.00086 1.9414 18.6 0.158 0.00530 2261.01 3.975997 1.08 181.1 0.34 0.01267 2.7123 192.4 2.208 66.62164 30.0 7 1 0.000018 0.08 39.2 +0.15-0.34 0.00048 0.8710 9.1 0.077 0.00274 2261.02 6.625427 0.78 90.7 0.95 0.00912 0.1799 57.9 2.376 69.20986 5.5 -1 1 0.002269 0.49 19.6 +0.01-0.66 0.00571 4.4306 14.7 0.649 0.06678

– 122 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2278.01 Kepler-376 c 14.172327 1.79 113.2 0.19 0.01396 6.6562 230.0 2.610 75.59795 27.1 7 1 0.000108 0.36 53.1 +0.26-0.19 0.00056 1.8824 13.9 0.123 0.00444 2278.02 Kepler-376 b 4.920199 1.07 460.8 0.34 0.00831 0.5968 80.0 3.915 68.40794 18.6 7 1 0.000073 0.22 216.4 +0.12-0.34 0.00040 0.2176 6.9 0.220 0.00788 2279.01 Kepler-377 c 27.014976 2.06 50.7 0.34 0.01542 1.0355 274.9 5.776 65.50842 25.2 7 1 0.000347 0.39 23.6 +0.09-0.34 0.00053 0.3120 14.4 0.201 0.00837 2279.02 Kepler-377 b 12.509529 1.39 141.3 0.06 0.01042 1.6648 126.0 4.022 70.00758 15.1 7 1 0.000257 0.27 65.7 +0.42-0.06 0.00067 0.8560 13.7 0.350 0.01348 2287.01 Kepler-378 b 16.092361 0.75 15.2 0.54 0.01023 11.5243 119.8 1.937 75.51349 20.4 7 1 0.000073 0.15 2.9 +0.05-0.46 0.00204 5.0362 7.3 0.092 0.00296 2287.02 Kepler-378 c 28.906009 0.70 6.9 0.35 0.00960 7.3805 114.5 3.043 91.82172 15.2 7 1 0.000216 0.05 1.3 +0.10-0.35 0.00044 2.4714 7.3 0.164 0.00444 2289.01 Kepler-379 c 62.784697 2.29 19.3 0.18 0.01603 5.1586 301.9 4.678 90.30359 21.6 7 1 0.000661 0.43 8.3 +0.27-0.18 0.00063 1.2853 19.0 0.162 0.00544 2289.02 Kepler-379 b 20.098380 1.66 88.8 0.00 0.01162 1.3194 159.2 5.105 140.57590 22.5 7 1 0.000180 0.31 38.4 +0.45-0.00 0.00049 0.2993 10.0 0.169 0.00529 2298.01 16.667069 0.66 10.3 0.20 0.01204 3.1659 181.5 3.512 74.76581 21.5 2 1 0.000153 0.06 3.4 +0.25-0.20 0.00054 0.8974 11.4 0.169 0.00567 2298.02 31.805873 0.64 4.4 0.29 0.01166 4.3036 167.5 3.848 83.67545 15.3 2 1 0.000424 0.06 1.5 +0.17-0.29 0.00069 1.4822 16.7 0.223 0.00854 2311.01 191.855282 1.28 2.0 0.39 0.01184 23.4614 165.5 3.830 227.45659 8.3 2 1 0.008705 0.39 0.8 +0.35-0.33 0.00303 8.6051 23.5 0.892 0.01421 2311.02 13.724381 0.64 67.3 0.56 0.00595 0.0504 25.4 11.092 78.12506 11.3 2 1 0.000689 0.12 26.6 +0.01-0.48 0.00049 0.0595 6.5 1.282 0.03153 2333.01 Kepler-380 b 3.930821 1.19 716.2 0.19 0.00894 1.2445 93.2 2.962 68.19896 22.7 7 1 0.000038 0.24 356.6 +0.24-0.19 0.00036 0.3224 6.3 0.148 0.00643 2333.02 Kepler-380 c 7.630004 1.27 294.3 0.04 0.00951 2.5791 106.4 2.949 70.08071 19.8 7 1 0.000073 0.28 146.5 +0.42-0.04 0.00090 0.7768 7.7 0.141 0.00585 2339.01 2.032315 1.07 248.0 0.13 0.01450 12.4446 263.6 1.121 65.64354 28.6 7 1 0.000007 0.07 47.0 +0.33-0.13 0.00064 3.5921 15.7 0.065 0.00193 2339.02 65.190044 1.01 2.4 0.21 0.01371 1.2790 236.8 7.485 110.59589 4.3 -1 1 0.005426 0.11 0.5 +0.25-0.21 0.00128 1.0083 39.4 1.706 0.03826 2352.01 Kepler-381 c 13.391635 1.12 230.2 0.49 0.00653 1.9288 49.0 3.417 66.05506 27.5 5 1 0.000129 0.25 118.7 +0.01-0.48 0.00023 0.7515 2.4 0.136 0.00424

– 123 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2352.02 Kepler-381 b 5.629021 0.99 723.6 0.29 0.00581 0.7095 40.1 3.913 67.74616 36.6 5 1 0.000028 0.22 372.9 +0.14-0.29 0.00015 0.1563 1.4 0.081 0.00277 2352.03 8.256319 0.99 436.2 0.45 0.00581 6.5077 38.9 1.987 70.92490 21.6 2 1 0.000053 0.22 224.8 +0.10-0.38 0.00024 2.5469 2.6 0.111 0.00388 2357.01 2.420847 1.94 767.8 0.97 0.01967 0.0229 253.9 3.355 66.58075 23.3 7 1 0.000026 0.95 837.4 +0.00-0.68 0.00325 0.4632 15.7 0.140 0.00675 2357.02 15.904293 2.02 61.2 0.37 0.02053 15.5474 477.3 1.951 64.49792 14.8 2 1 0.000151 0.94 66.7 +0.36-0.13 0.00134 5.4113 46.8 0.141 0.00663 2362.01 2.237251 1.85 396.9 0.24 0.02118 6.9104 534.5 1.391 66.67097 27.5 2 1 0.000013 1.05 557.8 +0.20-0.23 0.00081 1.9939 31.0 0.086 0.00410 2362.02 11.085085 2.21 46.1 0.29 0.02528 19.5342 756.6 1.658 288.03262 20.0 7 1 0.000097 1.25 64.8 +0.19-0.29 0.00127 5.3647 58.4 0.099 0.00421 2369.01 11.018174 2.28 120.7 0.41 0.02101 0.9338 507.8 4.346 72.87563 21.5 7 1 0.000121 1.12 138.5 +0.05-0.39 0.00081 0.3251 32.6 0.216 0.00755 2369.02 6.314644 1.46 253.5 0.03 0.01343 12.7891 218.2 1.630 106.29192 7.8 2 1 0.000133 0.74 290.9 +0.48-0.03 0.00168 6.7263 47.3 0.335 0.01134 2374.01 Kepler-382 b 5.262155 1.32 259.8 0.60 0.01284 0.7287 182.4 3.229 69.36774 21.3 7 1 0.000047 0.63 296.1 +0.33-0.41 0.00057 0.6151 12.8 0.147 0.00573 2374.02 Kepler-382 c 12.162701 1.59 83.5 0.03 0.01541 14.2957 289.0 1.958 70.53267 16.9 7 1 0.000109 0.77 95.2 +0.44-0.03 0.00092 5.4615 25.6 0.165 0.00493 2413.01 Kepler-383 b 12.904532 1.32 22.0 0.33 0.01796 2.6488 402.8 3.322 77.31985 23.4 7 1 0.000121 0.52 21.9 +0.11-0.33 0.00080 0.7893 24.5 0.159 0.00557 2413.02 Kepler-383 c 31.200751 1.24 6.7 0.36 0.01685 4.3998 349.7 3.718 73.07568 13.9 7 1 0.000354 0.49 6.6 +0.10-0.36 0.00098 1.4503 31.1 0.195 0.00710 2414.01 Kepler-384 b 22.597053 1.12 30.7 0.02 0.01158 0.8992 161.5 6.031 73.41990 26.2 7 1 0.000243 0.32 21.0 +0.40-0.02 0.00042 0.1744 8.3 0.173 0.00748 2414.02 Kepler-384 c 45.348269 1.13 12.1 0.10 0.01176 3.8633 165.2 4.657 75.25080 18.2 7 1 0.000779 0.33 8.2 +0.35-0.10 0.00061 1.1208 14.0 0.255 0.00907 2422.01 26.783945 1.86 27.7 0.23 0.01690 2.6093 347.4 4.384 73.75259 20.9 7 1 0.000252 0.76 27.4 +0.22-0.23 0.00072 0.6866 22.1 0.187 0.00589 2422.02 57.389341 1.73 10.1 0.13 0.01574 12.6430 304.1 3.394 74.62058 13.2 2 1 0.000983 0.71 9.9 +0.34-0.13 0.00108 4.2080 35.1 0.291 0.00981 2433.01 Kepler-385 c 15.163161 3.04 112.7 0.94 0.02475 0.0285 469.6 6.804 77.45741 25.7 7 1 0.000269 1.56 136.2 +0.01-0.65 0.00290 0.2704 23.9 0.163 0.01090

– 124 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2433.02 Kepler-385 b 10.043686 2.73 193.1 0.84 0.02223 0.1762 459.9 4.597 286.62503 29.6 7 1 0.000128 1.38 233.5 +0.00-0.61 0.00143 0.3829 22.4 0.164 0.00531 2442.01 Kepler-386 c 25.193458 1.58 15.8 0.00 0.01885 2.2588 439.0 4.634 79.43209 19.6 7 1 0.000342 0.89 21.0 +0.44-0.00 0.00093 0.5987 33.0 0.216 0.00820 2442.02 Kepler-386 b 12.310430 1.39 41.1 0.80 0.01662 0.4217 263.6 3.939 74.86305 14.2 7 1 0.000218 0.82 54.7 +0.02-0.56 0.00318 0.9973 26.4 0.219 0.01048 2443.01 Kepler-387 b 6.791636 1.03 235.4 0.03 0.00902 1.8016 95.0 3.197 69.48730 20.1 7 1 0.000094 0.24 134.9 +0.42-0.03 0.00043 0.5608 8.0 0.230 0.00817 2443.02 Kepler-387 c 11.837549 0.89 113.3 0.13 0.00782 2.8891 72.4 3.256 75.21210 12.7 7 1 0.000329 0.22 65.0 +0.33-0.13 0.00068 2.0817 11.0 0.431 0.01677 2466.01 Kepler-388 b 3.173315 0.81 97.1 0.20 0.01267 3.0825 202.8 2.042 66.69965 24.8 7 1 0.000018 0.10 40.7 +0.27-0.20 0.00063 0.9769 13.0 0.112 0.00350 2466.02 Kepler-388 c 13.297004 0.86 14.5 0.18 0.01346 3.1599 235.1 3.277 73.94788 17.0 7 1 0.000185 0.11 6.1 +0.27-0.18 0.00077 1.0107 18.7 0.193 0.00559 2473.01 Kepler-389 b 3.244107 1.51 279.0 0.25 0.01745 2.8670 366.2 2.094 65.94408 20.9 7 1 0.000030 0.77 352.2 +0.19-0.25 0.00080 0.9125 26.7 0.132 0.00642 2473.02 73.461159 4.59 4.4 0.86 0.05304 0.0560 2516.5 13.430 306.15924 4.5 -1 1 0.022941 2.38 5.6 +0.06-0.60 0.00550 0.1798 210.7 0.813 0.01350 2473.03 Kepler-389 c 14.511430 1.46 38.8 0.31 0.01691 4.2485 343.1 2.967 76.86026 11.1 7 1 0.000305 0.75 48.9 +0.11-0.31 0.00123 1.9027 43.2 0.272 0.01341 2498.01 Kepler-390 b 6.738088 0.82 90.8 0.37 0.00965 3.5002 113.6 2.377 66.32269 17.7 7 1 0.000067 0.07 19.5 +0.08-0.37 0.00052 1.4748 9.8 0.188 0.00634 2498.02 Kepler-390 c 13.060022 0.79 37.6 0.48 0.00936 4.0772 102.1 2.665 77.33121 14.0 7 1 0.000257 0.08 8.1 +0.00-0.48 0.00068 2.5360 12.7 0.368 0.00969 2521.01 28.475127 2.17 13.1 0.66 0.02646 1.2747 755.3 4.524 87.56989 22.3 7 1 0.000450 1.03 15.0 +0.01-0.51 0.00398 0.8775 54.8 0.359 0.00879 2521.02 4.866397 2.50 140.1 0.99 0.03055 0.0658 351.3 2.426 286.32935 15.9 2 1 0.000058 1.25 159.8 +0.01-0.72 0.00661 3.9292 38.0 0.314 0.00559 2529.01 16.796995 1.56 6.7 0.58 0.02998 2.3402 1027.9 3.354 67.04279 23.2 7 1 0.000131 0.29 2.5 +0.02-0.49 0.00490 1.0720 60.7 0.135 0.00425 2529.02 64.001621 1.65 1.1 0.50 0.03170 3.9346 1193.7 4.642 65.61472 15.3 2 1 0.000854 0.18 0.4 +0.02-0.47 0.00189 1.9227 96.3 0.286 0.00680 2533.01 6.033261 4.28 1648.3 0.84 0.00988 0.0101 90.9 10.281 70.11681 24.2 7 1 0.000108 1.11 886.4 +0.08-0.58 0.00127 0.0169 4.7 0.276 0.00904

– 125 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2533.02 9.492108 2.57 901.6 0.76 0.00593 0.0167 31.3 11.348 69.15150 6.1 -1 1 0.001259 0.65 484.9 +0.21-0.53 0.00069 0.1431 9.6 2.740 0.05472 2534.01 3.025555 1.38 1179.5 0.44 0.00958 0.7074 105.0 3.011 67.36433 23.8 7 1 0.000027 0.28 546.2 +0.05-0.42 0.00038 0.2412 6.8 0.135 0.00468 2534.02 5.422036 1.26 549.5 0.01 0.00876 2.4738 90.1 2.669 66.45996 13.3 2 1 0.000054 0.26 254.4 +0.44-0.01 0.00053 0.7247 9.1 0.152 0.00612 2541.01 Kepler-391 b 7.416755 3.20 1009.7 0.38 0.00821 0.1608 75.3 6.832 70.95889 23.7 7 1 0.000129 0.78 570.2 +0.07-0.38 0.00036 0.0492 5.1 0.239 0.01172 2541.02 Kepler-391 c 20.485435 3.54 261.9 0.11 0.00909 0.1561 96.3 10.381 79.92391 21.6 7 1 0.000393 0.86 147.9 +0.35-0.11 0.00045 0.0398 6.6 0.327 0.01078 2554.01 39.756405 1.43 2.3 0.82 0.02733 23.7443 673.4 1.500 83.59853 14.1 2 1 0.000298 0.19 0.8 +0.10-0.01 0.00276 6.3979 73.6 0.141 0.00377 2554.02 10.271243 0.84 14.1 0.61 0.01596 1.4832 283.5 3.162 68.17706 18.9 7 1 0.000106 0.17 5.0 +0.05-0.46 0.00291 0.8678 24.4 0.180 0.00644 2585.01 Kepler-392 b 5.341853 1.00 407.4 0.24 0.00814 1.5101 78.1 3.043 69.30141 20.9 7 1 0.000055 0.21 232.9 +0.18-0.24 0.00036 0.3850 5.6 0.185 0.00756 2585.02 Kepler-392 c 10.423118 1.10 164.0 0.08 0.00895 7.6826 94.3 2.266 68.15286 15.6 7 1 0.000087 0.23 93.8 +0.39-0.08 0.00049 2.3988 8.3 0.153 0.00501 2586.01 2.131972 1.66 949.9 0.05 0.01486 3.9066 265.6 1.689 66.64996 23.1 7 1 0.000011 0.69 986.4 +0.42-0.05 0.00065 1.0386 16.1 0.082 0.00354 2586.02 5.970517 1.32 244.6 0.52 0.01178 18.1252 153.5 1.219 289.52637 6.6 -1 1 0.000127 0.60 254.0 +0.28-0.33 0.00211 7.4219 39.0 0.317 0.00824 2595.01 Kepler-393 b 9.182417 1.29 302.8 0.63 0.00852 0.4588 76.9 4.343 67.04813 21.8 7 1 0.000096 0.25 135.8 +0.02-0.49 0.00035 0.4342 5.3 0.170 0.00560 2595.02 Kepler-393 c 14.613612 1.33 163.1 0.76 0.00883 0.2281 79.0 5.401 73.41240 18.9 7 1 0.000231 0.31 73.1 +0.02-0.55 0.00119 0.3699 5.7 0.191 0.00736 2597.01 Kepler-394 b 8.005013 1.60 279.6 0.24 0.01293 1.6150 193.6 3.419 71.71069 17.2 7 1 0.000090 0.82 332.4 +0.24-0.24 0.00064 0.6265 16.5 0.246 0.00687 2597.02 Kepler-394 c 12.130686 1.66 159.2 0.45 0.01341 1.3825 204.5 3.819 72.89729 15.6 7 1 0.000180 0.86 189.2 +0.02-0.45 0.00073 0.6291 18.5 0.243 0.00918 2597.03 5.613607 1.45 442.3 0.45 0.01173 1.4566 154.9 2.903 64.81498 15.9 2 1 0.000061 0.75 525.7 +0.52-0.25 0.00069 0.6843 14.5 0.192 0.00585 2612.01 4.612236 0.52 260.7 0.35 0.00507 1.8111 30.6 2.627 66.86219 16.6 2 1 0.000042 0.26 312.0 +0.12-0.35 0.00027 0.6492 2.6 0.160 0.00546

– 126 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2612.02 7.573075 0.50 136.0 0.39 0.00490 2.8200 28.5 2.619 64.93594 13.2 2 1 0.000082 0.25 162.8 +0.06-0.39 0.00035 1.2671 3.4 0.206 0.00737 2639.01 25.112309 2.95 56.6 0.34 0.02307 0.4022 622.6 7.806 79.34614 11.5 2 1 0.007353 1.34 59.8 +0.12-0.34 0.00184 0.6200 92.1 1.121 0.03371 2639.02 2.121026 3.66 1500.6 0.32 0.02864 0.2344 969.5 4.207 102.97844 7.6 2 1 0.002795 1.66 1583.0 +0.17-0.32 0.00249 0.1371 174.6 1.283 0.11666 2650.01 Kepler-395 c 34.989262 1.32 2.9 0.40 0.02173 2.7856 563.6 4.459 77.22265 15.7 7 1 0.000543 0.09 0.6 +0.09-0.38 0.00126 1.0732 50.5 0.264 0.00909 2650.02 Kepler-395 b 7.054346 1.03 24.5 0.09 0.01702 8.9062 363.6 1.909 69.19136 13.8 7 1 0.000070 0.08 4.2 +0.39-0.09 0.00106 3.4686 38.3 0.197 0.00566 2671.01 21.476432 17.95 38.7 0.69 0.16440 1.4175 28135.7 4.709 82.26022 316.1 0 2 0.000038 0.17 0.0 +0.02-0.02 0.00159 0.1147 234.7 0.060 0.00141 2671.02 17.551013 5.90 50.6 0.18 0.05401 3.0830 3662.7 3.777 62.74550 11.3 0 1 0.000987 0.60 0.0 +0.28-0.18 0.00545 1.5238 6066.0 0.775 0.04631 2672.01 Kepler-396 c 88.519806^{tt} 4.92 5.6 0.03 0.04573 2.6372 2564.8 6.864 115.64230 286.3 5 1 0.000130 0.78 2.2 +0.16-0.03 0.00021 0.0923 14.1 0.025 0.00084 2672.02 Kepler-396 b 42.990863^{tt} 3.21 14.8 0.14 0.02983 3.9207 1087.7 4.616 95.51105 170.4 5 1 0.000073 0.51 5.8 +0.21-0.14 0.00038 0.4466 12.9 0.036 0.00106 2674.01 197.510226 10.59 6.4 0.84 0.05311 0.3007 2625.8 11.245 205.38773 202.5 7 0 0.000461 3.48 5.2 +0.01-0.01 0.00046 0.0288 17.6 0.100 0.00142 2674.02 11.172725 1.67 296.9 0.20 0.00839 0.3950 82.3 6.131 73.00468 20.5 7 1 0.000167 0.55 238.3 +0.23-0.20 0.00039 0.1012 5.9 0.277 0.00979 2681.01 Kepler-397 c 135.498527 6.18 1.8 0.84 0.07375 1.0578 4962.7 6.901 166.69038 78.3 7 1 0.000668 0.56 0.5 +0.02-0.05 0.00203 0.3028 96.5 0.223 0.00246 2681.02 Kepler-397 b 22.250949 2.46 20.1 0.94 0.02933 2.7403 612.2 1.689 82.43067 13.3 7 2 0.000186 21.32 5.0 +0.74-0.11 0.25418 8.5143 92.8 0.283 0.00524 2693.01 Kepler-398 b 4.081423 0.93 70.8 0.87 0.01384 0.4178 158.0 2.287 66.85795 44.8 7 1 0.000011 0.10 12.8 +0.03-0.60 0.00132 1.1649 4.8 0.047 0.00176 2693.02 Kepler-398 c 11.419412 1.01 18.1 0.90 0.01503 0.2582 173.6 3.342 75.11768 34.2 7 1 0.000047 0.11 3.2 +0.04-0.63 0.00154 1.1335 6.5 0.085 0.00271 2696.01 96.456564 5.39 27.5 0.66 0.02979 0.3050 943.7 10.976 147.74663 78.0 2 2 0.000459 2.29 27.1 +0.02-0.55 0.00076 0.1850 15.8 0.172 0.00254 2696.02 44.564698 3.06 76.8 0.42 0.01692 0.7522 324.4 7.335 76.42892 41.3 7 1 0.000355 1.30 76.0 +0.05-0.42 0.00045 0.2064 12.0 0.156 0.00488

– 127 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2707.01 Kepler-399 d 58.034616 1.89 5.6 0.19 0.02545 3.1183 788.3 5.435 71.73323 39.1 7 1 0.000363 1.01 7.0 +0.25-0.19 0.00073 0.6519 26.3 0.137 0.00419 2707.02 Kepler-399 b 14.425281 0.96 35.7 0.21 0.01287 2.3694 199.1 3.686 69.75198 16.1 7 1 0.000144 0.51 45.1 +0.25-0.21 0.00067 0.6363 16.7 0.178 0.00606 2707.03 Kepler-399 c 26.675690 1.43 15.8 0.18 0.01927 10.8486 448.5 2.758 82.99908 21.8 7 1 0.000171 0.77 19.9 +0.27-0.18 0.00084 3.1452 27.5 0.157 0.00430 2711.01 Kepler-400 b 9.024389 1.65 186.1 0.01 0.01323 2.5889 209.0 3.128 66.53848 42.1 7 1 0.000034 0.30 80.8 +0.45-0.01 0.00036 0.5470 6.8 0.072 0.00239 2711.02 Kepler-400 c 17.340824 1.49 78.4 0.17 0.01192 3.6142 168.9 3.425 71.96655 25.0 7 1 0.000100 0.28 34.0 +0.25-0.17 0.00042 0.7652 8.6 0.119 0.00419 2714.01 Kepler-401 b 14.383035 1.71 149.6 0.54 0.01177 0.1145 151.0 8.729 73.55968 30.5 7 1 0.000211 0.40 65.0 +0.08-0.42 0.00173 0.0524 6.6 0.277 0.01006 2714.02 Kepler-401 c 47.318218 2.15 30.8 0.24 0.01477 0.3239 256.6 10.579 103.06041 27.4 7 1 0.000695 0.40 13.4 +0.21-0.24 0.00040 0.0709 9.2 0.206 0.00897 2722.01 Kepler-402 c 6.124821 1.56 425.4 0.59 0.01128 0.6958 138.8 3.467 67.93600 24.3 7 1 0.000026 0.35 199.4 +0.01-0.49 0.00125 0.5655 4.4 0.081 0.00285 2722.02 Kepler-402 e 11.242861 1.46 189.0 0.21 0.01058 1.2396 130.8 4.194 69.31655 31.9 7 1 0.000059 0.29 88.6 +0.27-0.21 0.00035 0.3199 5.3 0.103 0.00355 2722.03 Kepler-402 b 4.028751 1.22 756.2 0.06 0.00883 1.3113 91.2 2.985 66.76902 19.1 7 1 0.000019 0.24 354.5 +0.41-0.06 0.00028 0.2806 4.1 0.087 0.00310 2722.04 Kepler-402 d 8.921099 1.38 259.9 0.11 0.00998 1.3508 117.2 3.838 70.49095 17.4 7 1 0.000056 0.27 121.8 +0.34-0.11 0.00030 0.3142 5.2 0.108 0.00423 2732.01 Kepler-403 b 7.031462 1.25 376.4 0.11 0.00864 0.3007 87.4 5.848 67.45161 37.9 7 1 0.000051 0.22 159.4 +0.33-0.11 0.00024 0.0591 3.3 0.128 0.00453 2732.02 13.611604 1.27 156.2 0.40 0.00875 0.2221 87.4 7.456 77.17178 20.5 2 1 0.000118 0.23 66.1 +0.06-0.40 0.00026 0.0626 3.8 0.157 0.00500 2732.03 Kepler-403 c 54.280749 1.75 24.6 0.53 0.01206 1.8929 161.9 5.373 73.71720 21.5 7 1 0.000562 0.32 10.4 +0.01-0.45 0.00043 0.8008 9.1 0.201 0.00648 2768.01 Kepler-404 b 11.829851 1.27 68.7 0.56 0.01318 0.3369 168.6 5.635 70.61764 14.3 7 1 0.000209 0.55 62.9 +0.41-0.35 0.00281 0.1950 19.3 0.422 0.01179 2768.02 Kepler-404 c 14.751166 1.72 51.3 0.85 0.01785 13.7961 286.4 1.166 70.13760 10.3 7 1 0.000261 0.85 47.0 +0.03-0.59 0.00576 7.1083 43.4 0.351 0.01059 2942.01 13.843068 1.83 56.4 0.03 0.01981 1.8321 472.3 4.072 72.94845 17.6 2 1 0.000160 0.76 58.7 +0.44-0.03 0.00090 0.5083 32.7 0.197 0.00822

– 128 –

Table 3—Continued

KOI Kepler ID P R_p S b R_p/R_⋆ ρ_c T_{dep} T_{dur} T_0 S/N fp DynTest days R_⊕ S_⊕ g cm^{−3} ppm hours BJD-2454900

2942.02 24.276574 1.90 26.8 0.09 0.02059 1.9279 516.7 4.814 85.41539 16.4 2 1 0.000422 0.79 27.9 +0.37-0.09 0.00103 0.5088 48.6 0.269 0.01227 3057.01 Kepler-405 c 29.726682 4.66 23.1 0.88 0.04775 12.7679 2021.9 1.534 1660.20398 18.6 7 2 0.011477 26.65 27.1 +0.71-0.07 0.27214 7.3513 1850.8 0.525 0.40097 3057.02 Kepler-405 b 10.613839 2.08 90.6 0.45 0.02130 1.5557 526.1 3.538 296.73676 18.8 7 1 0.000111 0.99 106.3 +0.01-0.42 0.00088 0.5449 10595.4 0.509 0.00454

Note. — fp: 0 - false-positive, 1 - Period/Epoch collision, 2 - not clean centroid, 3 - nearby stars makes unclean, 4 - unsaturated manual centroid pass, 5 - saturated pass, 6 - Q1-Q12 autopass, 7 - Q1-Q15 autopass. DynTest: 0 - failed dynamic test, 1 - dynamic test not performed, 2 - passes dynamic test

– 129 –

Table 4. Close Neighbours Discovered with High-resolution Imaging

KOI Companion Offset (arcsec) Transit Position σ (arcsec) Companion Offset from Transit Position in σ Disposition

112.01 0.1 0.1840 1.0 fail 112.02 0.1 0.2900 0.4 fail 270.01 0.05 saturated <3 fail 270.02 0.05 saturated <3 fail 285.01 1.44 saturated <3 fail 285.02 1.44 saturated <3 fail 279.01 0.922 saturated <3 fail 279.02 0.922 saturated <3 fail 307.01 0.080 0.2745 1.1, 1.1 fail 307.02 0.080 0.2333 0.6, 1.3 fail 102.01 2.76, 5.45 0.7886 6.0 pass 102.02 2.76, 5.45 0.7886 6.0 pass 123.01 2.03, 5.27 0.1950 11.3 pass 123.02 2.03, 5.27 0.2290 9.2 pass 124.01 2.4 0.1945 12.7 pass 124.02 2.4 0.2187 11.8 pass 153.01 5.14 0.1104 53.7 pass 153.02 5.14 0.1186 61.8 pass 251.01 3.45, 4.76 0.1026 44.5 pass 251.02 3.45, 4.76 0.6723 9.6 pass 283.01 5.96 saturated >3 pass 283.02 5.96 saturated >3 pass 555.01 4.01 0.3456 25 pass 555.02 4.01 0.1852 12.5 pass 298.02 0.825 0.9002 1.4 fail

Note. — KOIs with otherwise clean centroids that have close companions revealed by high-resolution imaging. For non-saturated targets, the companion offset in σ is companion’s offset divided by the uncertainty in the centroid measurement for that KOI. When the companion is within 3σ of the measured transit location we do not validate the target. Two distances in σ are given for KOI 307 because there is a 180 degree ambiguity in the position angle of the companion.

– 130 –

Table 5. TTV Measurements n t_n T T V_n T T V_{nσ} days days

KOI-89.01

1 83.56887677 -0.00469193 0.00463798 2 168.25615788 0.00778280 0.00516824 3 252.94343900 -0.00271064 0.00555464 4 337.63072011 -0.00016954 0.00476691 5 422.31800122 0.00327206 0.00417621 6 507.00528233 -0.00463520 0.00479403 7 591.69256345 0.01299045 0.00805245 8 676.37984456 0.00975161 0.00425755 9 761.06712567 0.02165216 0.00395487 10 845.75440678 -0.04881705 0.01201981 11 930.44168789 0.00158643 0.00540031 12 1015.12896901 0.00220596 0.00437501 13 1099.81625012 0.00631963 0.00419635 KOI-89.02

1 222.88301163 -0.02540113 0.00275003 2 430.46918841 0.02681994 0.00248308 3 638.05536519 0.00738233 0.00321930 4 845.64154197 0.01459505 0.00787256 5 1053.22771875 -0.02928310 0.00312264 KOI-94.01

1 65.74076388 0.00225177 0.00036658 2 88.08374268 -0.00049457 0.00028418 11 289.17055180 -0.00025281 0.00049360 12 311.51353060 0.00114436 0.00270664 13 333.85650939 0.00046567 0.00432967 14 356.19948818 0.00106531 0.00057328 15 378.54246697 0.00003749 0.00055978 16 400.88544576 -0.00020364 0.00056129 17 423.22842456 0.00156312 0.00027064 18 445.57140335 -0.00175704 0.00029028 19 467.91438214 0.00051162 0.00059437 28 669.00119127 0.00237404 0.00036207 29 691.34417006 -0.00064501 0.00285220 30 713.68714885 0.00142408 0.00038260 32 758.37310644 -0.00142232 0.00126874 33 780.71608523 0.00043150 0.00025590 34 803.05906402 -0.00101907 0.00030884 35 825.40204281 0.00169851 0.00036495 45 1048.83183073 -0.00113621 0.00041459 ...

Note. — Table 5 is published in its entirety in the electronic edition of the Astrophysical Journal Letters. A portion is shown here for guidance regarding its form and content.

– 131 –

Fig. 1.— Histogram of the signal-to-noise ratio for the Q1–Q8 KOI (first row of Table 1 sample. Approximately 1/3 of the sample has a S/N greater than 50.

– 132 –

Fig. 2.— Cumulative distribution of orbital periods for multi-planets (black), single KOIs (red), FP KOIs (green), P/T0 collisions (cyan) and EB systems (blue). All periods used in normalization. Other time scales are shown in Figure 2 of Paper II.

– 133 –

Fig. 3.— Multi-planet population showing incident flux S (relative to the flux received by the Earth), versus planetary radius (R_⊕). Planets validated in this paper are marked with filled circles, unvalidated planets in multi systems are marked with open circles and planet candidates found in single systems are plotted with dots. All planets and planet candidates shown have P > 1.6 days, b + b_σR_p/R_⋆< 1.00 and have not been identified as a FA, FP or P/T0 collision. The two coloured bands display estimates of the inner and outer habitable zone based on the Recent Venus and Early Mars models from Kopparapu et al. (2013). The colours display the range each boundary as a function of T_{eff} from 3000 K (red) to 7000 K (light-blue).

– 134 –

Fig. 4.— Transits of all of the validated planets in systems with a newly validated planet with S < 1.5. The beauty shots in the upper panels display the sizes of the stars and planet candidates to a uniform scale. The color of the stars and the impact parameters of the planetary transits reflect estimates of stellar and transit characteristics given in Tables 2 and 3. Verified planets are shown in black while other candidates are green. Planets and candidates are displayed with distance below the middle of the star corresponding to the transit impact parameter. The lower panels show the detrended Kepler flux from the host star phased at the period of each transit signal and zoomed to a region around midtransit, shown in order of increasing orbital period. Black dots represent individual Kepler long cadence observations. The blue bars are the data binned 30 minutes in phase with 1σ uncertainties. The colored curves show the model transit fits, with colors corresponding to the last two digits of KOI designators as follows: red = .01, green = .02, blue = .03, cyan = .04. In each panel, the best-fit model for the other planet candidates was removed before plotting. All panels for a given system have an identical vertical scale, to show the relative depths, and identical horizontal scale, to show the relative durations, but scales differ between systems. The successive panels show KOIs 518, 1422, 1430 and 1596.

– 135 –

Fig. 5.— The distribution of differences in ρ_⋆ as measured by two planets orbiting the same star. The observed Kepler multi-planet population is shown in black with 1 σ Poisson uncertainties. Other lines show synthetic population models. All models incorporate the measurement uncertainty of ρ_⋆ from Table 3. The cyan line shows a synthetic model population with circular orbits and no hierarchical blends. The red line shows a synthetic population with an eccentricity distribution based on RV detected planets. The green line shows a synthetic population with eccentricity and a hierarchical blend rate of 0.5. The stellar companion masses are drawn from a 1/q distribution. The blue line shows a synthetic population similar to the green line except the stellar companion masses are drawn from a uniform distribution.

– 136 –

Fig. 6.— Plots of MCMC distributions for parameters describing a synthetic population of planet systems to measure the rate of hierarchical blends. The diagonal panels show histograms for each parameter, other panels show scatter plots of two parameters against one another.

– 137 –

Fig. 7.— Comparison of the eccentricity distribution of multi-planet systems (black), based on matching synthetic population models to the transiting multi-planet sample, to the eccentricity distribution of RV planets (blue) (Wright et al. 2013; Kipping 2013). The distributions are different at high significance. The relative fraction of low eccentricity planets was found to be large for the transiting multi-planet population.

– 138 –

Fig. 8.— The difference between ρ_⋆ and ρ_c is plotted vs ρ_⋆ to compare the mean stellar density derived from stellar modeling (ρ_⋆) to the geometrical estimate of the mean stellar density when a circular orbit is assumed (ρ_c). Values of ρ_⋆ derived from asteroseismology are shown with filled circles, values of ρ_⋆ derived from fitting stellar evolution models to spectroscopic classification (see §3) are shown with dots. The population of dots shifts towards positive values of ρ_⋆ – ρ_c as ρ_⋆ increases due to a poor match of our adopted stellar evolution models at low stellar mass.