arXiv:1403.6131v2 [astro-ph.IM] 28 Mar 2014

Astronomy & Astrophysics manuscript no. KimEROS2013 © ESO 2019 May 29, 2019

The EPOCH Project: I. Periodic variable stars in the EROS-2 LMC database

Dae-Won Kim^1, Pavlos Protopapas^2 , Coryn A.L. Bailer-Jones^1 , Yong-Ik Byun^3, Seo-Won Chang^3, Jean-Baptiste Marquette^4, and Min-Su Shin^5

1 Max-Planck Institute for Astronomy, Königstuhl 17, D-69117 Heidelberg, Germany 2 Harvard-Smithsonian Center for Astrophysics, 60 Garden, Cambridge, MA 02138, USA 3 Department of Astronomy and University Observatory, Yonsei University, 50 Yonsei-Ro, Seoul 120-749, South Korea 4 UPMC-CNRS, UMR7095, Institut d’Astrophysique de Paris, F-75014, Paris, France 5 Department of Physics, Oxford University, Parks Road, Oxford OX1 3PU, UK

May 29, 2019

ABSTRACT

The EPOCH (EROS-2 periodic variable star classification using machine learning) project aims to detect periodic variable stars in the EROS-2 light curve database. In this paper, we present the first result of the classification of periodic variable stars in the EROS-2 LMC database. To classify these variables, we first built a training set by compiling known variables in the Large Magellanic Cloud area from the OGLE and MACHO surveys. We crossmatched these variables with the EROS-2 sources and extracted 22 variability features from 28 392 light curves of the corresponding EROS-2 sources. We then used the random forest method to classify the EROS- 2 sources in the training set. We designed the model to separate not only δ Scuti stars, RR Lyraes, Cepheids, eclipsing binaries, and long-period variables, the superclasses, but also their subclasses, such as RRab, RRc, RRd, and RRe for RR Lyraes, and similarly for the other variable types. The model trained using only the superclasses shows 99% recall and precision, while the model trained on all subclasses shows 87% recall and precision. We applied the trained model to the entire EROS-2 LMC database, which contains about 29 million sources, and found 117 234 periodic variable candidates. Out of these 117 234 periodic variables, 55 285 have not been discovered by either OGLE or MACHO variability studies. This set comprises 1906 δ Scuti stars, 6 607 RR Lyraes, 638 Cepheids, 178 Type II Cepheids, 34 562 eclipsing binaries, and 11 394 long-period variables. A catalog of these EROS-2 LMC periodic variable stars will be available online at http://stardb.yonsei.ac.kr and at the CDS website (http://vizier.u-strasbg.fr/viz-bin/VizieR).

Key words. Stars: variables: general – Magellanic Clouds – Methods: data analysis

1. Introduction

Studying periodic variable stars has improved our understanding of the Universe for many decades. For instance, Cepheid variables are one of the most important variable types as a standard candle for measuring extra-galactic distances (Freedman et al. 2001; Riess et al. 2011) because of their well-established periodluminosity relation (Feast & Catchpole 1997; Storm et al. 2011), which provided evidence for the expanding Universe (Lemaître 1927; Hubble & Humason 1931). RR Lyrae stars are useful for tracing the Galaxy formation history (e.g. see Catelan 2009 and references therein) and for studying globular clusters (Carretta et al. 2000) and the Galactic structure (Oort & Plaut 1975; Vivas et al. 2001). In addition, long-period variables such as Mira variables show a period-luminosity relation that can be used for measuring distances to some objects in the Galaxy, such as globular clusters (Feast et al. 1989; Knapp et al. 2003). In brief, periodic variable stars are crucial for studying and understanding the Galaxy and the Universe.

The Expérience pour la Recherche d’Objets Sombres (EROS) is a wide-field sky survey for probing dark matter in the Galactic halo by detecting microlensing events (see Tisserand et al. 2007 and references therein). EROS monitored the Large/Small Magellanic Cloud (LMC/SMC), the Galactic bulge and spiral arms for about seven years, and was a major microlensing survey together with the MACHO (Alcock 2000) and OGLE (Udalski et al. 1997) microlensing surveys. In addition to microlensing detections, the EROS database is also useful for detecting periodic variable stars because of its well-sampled light curves over a long period of observation, relatively faint limiting magnitude of ∼20 in the EROS B band^1, its wide field of view, and two simultaneous passbands.

Previous studies have found several types of variable stars in the EROS-2 database. Beaulieu et al. (2001) discovered two variable stars resembling Herbig Ae/Be or classical Be stars, Tisserand et al. (2004) detected five R Coronae Borealis stars, Marquette et al. (2009) discovered 185 new beat Cepheid variables, Spano et al. (2011) reported forty-three thousand longperiod variable candidates, and Dubath et al. (2012) found about 300 variable candidates from a subset of EROS-2 database but without identifying their variable types. Although these works produced some variable star candidates of various types, no study has searched the entire EROS-2 light curve database to classify different types of variable stars including δ Scuti stars, RR Lyraes, Cepheids, eclipsing binaries, and long-period variables. For instance, Dubath et al. (2012) used a supervised machine-learning method and multiple variability features to train a classification model, but their training set is incomplete because it consists of visually classified variables sorted into four

1 EROS B and R bands (i.e., B_E and R_E ) are not a standard astronomical B and R bands. See Section 2 for details.

Article number, page 1 of 18

A&A proofs: manuscript no. KimEROS2013

classes including periodic, small-amplitude, semi-regular, and nonperiodic variables. Thus the model cannot distinguish conventional types of astronomical variable stars such as the types of variable stars listed above.

We initiated the EROS-2 PeriOdic variable star Classification using macHine learning (EPOCH) project^2 that aims to detect periodic variables in the EROS-2 light curve database to significantly increase the total number of known variable stars in the EROS-2 survey fields. The EPOCH project is different from the previous studies because we used 1) the richest possible training set including multiple types of variable stars, 2) a few tens of variability features to separate variable stars from others, and 3) one of the most powerful supervised classification methods, random forest (Breiman 2001). Random forest combines a large number of decision trees to build a classification model and has successfully solved many astronomical classification problems (e.g. Dubath et al. 2011; Pichara et al. 2012). Even though some of the above conditions were fulfilled by previous work, none of the works has fulfilled all of these conditions simultaneously.

In this paper, we present the first results of the EPOCH project. We also present periodic variable star candidates detected from the EROS-2 LMC light curve database. The EROS-2 database is briefly introduced in Section 2. Section 3 presents a classification method including 1) the training set we used to build a classification model, 2) multiple variability features, 3) parameter optimization for the random forest model training, and 4) performance of a trained model. We then show detection results of periodic variable stars from the entire EROS-2 LMC database in Section 4. Section 5 is a summary.

2. EROS-2 database

EROS-2 monitored the LMC/SMC, the Galactic center, and the spiral arms during its operation from July 1996 to March 2003 using the 1m Ritchey-Chrétien telescope, MARLY, at ESO (La Silla, Chile). The telescope was equipped with two cameras, one observing in the B_E (420-720nm, blue) band, the other in the R_E (620-920nm, red) band. Each camera contained eight 2048 × 2048 CCD detectors in mosaics, and had a field of view of 0.7^∘×1.4^∘ in RA and Dec, respectively. The pixel scale was 0.6^{′′} and the typical seeing at the site was 2^{′′} FWHM (Ansari & EROS Collaboration 2001; Tisserand et al. 2004).

The total number of sources in the EROS-2 database is about 87 million consisting of 29 million in the LMC, 4 million in the SMC, 44 million in the Galactic bulge, and 10 million sources in the spiral arms. Light curves obtained using the B_E band generally have better photometric accuracy and also have more measurements than R_E -band light curves (Spano et al. 2011). Fig. 1 shows a histogram of the B_E band magnitude of about 550k sources in the EROS-2 LMC fields. The limiting magnitude of the field sources is ∼20 B_E. The number of measurements for each light curve varies from field to field. For instance, B_E-band light curves around the central region of the LMC have 500 measurements on average, while B_E-band light curves at the outer region have 250 measurements on average.

3. Classification of periodic variables

In this section, we describe how we classify periodic variable stars in the EROS-2 LMC light-curve database. In Section 3.1,

2 http://stardb.yonsei.ac.kr

Fig. 1. Histogram of EROS B_E band magnitude of about 550k field sources from the EROS-2 LMC fields. The limiting magnitude is around 20 B_E .

we present a training set consisting of EROS-2 variable stars selected by crossmatching with the known OGLE and MACHO variables. Section 3.2 explains how we refined the light curve (e.g., cleaning spurious data points) before we extracted 22 variability features that are described in Section 3.3. We then present the random forest classification algorithm and summarize its performance in Section 3.4.

3.1. Training set

The classification quality of supervised machine-learning methods relies heavily on the training set. To build the richest possible training set, we therefore used the OGLE LMC variable star catalogs (Soszyński et al. 2008a,b, 2009a,b; Poleski et al. 2010; Graczyk et al. 2011), which are the most up-to-date and complete catalogs of periodic variable stars over the EROS-2 fields. Based on these catalogs, we compiled a list of periodic variable stars including δ Scuti stars, RR Lyraes, Cepheids, Type II Cepheids, eclipsing binaries, and long-period variables (DSCTs, RRLs, CEPHs, T2CEPHs, EBs and LPVs, respectively, Table 1). We adopted the OGLE classification scheme for variable subclasses (e.g. RRL ab, c, d, and e type; see Table 2 for the full list). We added 982 blue variables detected from the MA- CHO database (Keller et al. 2002). Many of these blue variables are probably Be stars since their variability characteristics are consistent with those of Be stars (Keller et al. 2002). We also added 565 quasi-stellar objects (QSOs) to the list that were selected using the OGLE LMC database (Kozlowski et al. 2013). Although we do not aim to classify either blue variables (BVs) or QSOs from the EROS-2 database, including these pseudo- or non-periodic variables in the list is important to exclude these variable types during the selection of periodic variable candidates. There are many BVs in the LMC, some of which show periodic patterns in their light curves. We did not include variable candidates from Marquette et al. (2009), Spano et al. (2011), and Dubath et al. (2012), because they have too few variable candidates of each type. More importantly, using variable sources mainly from a single survey (i.e., OGLE) helps maintain consistency of the training set. The total number of sources in the compiled catalog is 149 388.

Article number, page 2 of 18

Dae-Won Kim et al.: The EPOCH Project: I. Periodic variable stars in the EROS-2 LMC database

Table 1. Acronyms of each variable type

Variable type Acronym

δ Scuti DSCT RR Lyrae RRL Cepheid CEPH Type II Cepheid T2CEPH Eclipsing binary EB long-period variable LPV Blue variable BV

Fig. 2. Cumulative histogram of distances to the EROS-2 counterparts crossmatched with the previously known variables. The largest search radius for crossmatching is 3^{′′}. Most of the variables are crossmatched within a 1.5^{′′} search radius.

We then crossmatched these variables with the entire EROS- 2 LMC database with a 3^{′′} search radius that yielded 120 825 counterparts, 119 480 of which are OGLE periodic variable stars and the remaining 1 345 sources are QSOs or BVs. Fig. 2 shows a cumulative histogram of distances to the counterparts. To minimize the number of incorrect crossmatches, we only selected sources among these counterparts where the distance between the nearest neighbor and second-nearest neighbor is larger than 3^{′′}. After removing these objects, 97 912 EROS-2 sources remained.

Even if the known OGLE variables show clear variability in their light curves, it is possible that the crossmatched EROS-2 sources might not show clear variability because of the photometric uncertainty, blending with other sources, different sampling rate, or incorrect crossmatching. To exclude such light curves from a training set, one of us (DWK) visually examined raw- and phase-folded light curves of all 97 912 EROS-2 counterparts. During the visual examination, we removed the light curves without variability or periodicity. Such a pure training set is important because the goal of this work is to select periodic variable candidates from the entire EROS-2 database, which consists of several tens of millions of light curves. Therefore minimizing false positives mainly consisting of non-variables is the most critical task, which is facilitated by having a highquality training set. Fig. 3 shows example light-curves of two RRL variables. We retained light curves with clear variability in the EROS-2 light curves, as shown in the left panels. We visually examined an EROS-2 reference image for the source shown in the right panel of Fig. 3 and found that the source is blended with a nearby bright star identified as a RRL variable by the OGLE. This particular case shows that the OGLE differential photometry (the DIA, Alard & Lupton 1998) is more efficient than the fixed-position photometry of the EROS (the PEIDA, Ansari 1996) to identify variable stars in crowded fields. After this visual removal, we had a set of 27 892 periodic variables.

We finally added non-variable sources to this set of visually cleaned light curves by randomly selecting about 5 000 light curves that are spread over the whole EROS-2 LMC fields and are not in the 120 825 EROS counterparts mentioned in the previous paragraph. Adding non-variables to the training set is critical when selecting variable candidates from the large EROS-2 database because the majority of light curves are non-variables. Therefore a classification model has to be trained in such a way that it excludes non-variables during the variable-star selection. To balance the number of light curves through the EROS-2 magnitude range, we selected about 800 non-variable light curves for each of the magnitude ranges, 13-16, 16-17, 17-18, 18-19, 19-20, and 20-21 B_E. If we had randomly selected light curves without the regular magnitude range, there would have been substantially fewer light curves at the brighter end than light curves at the fainter end, which is undesirable because then a trained model might be inefficient in excluding possible non-variables at the bright end. We also visually examined these non-variable light curves and excluded light curves with variability. After adding these non-variables, the final number of light curves in the training set is 32 683.

Without the visual removal of non-variable sources mentioned in the previous paragraph, we observed a significant drop of classification performance, in particular a performance decreased by ∼20% for non-variables (see Section 3.4.2 for the definition of classification performance). This decrease could cause many misclassifications of non-variables into variables, which is not desired because most of the light curves from the EROS-2 database are expected to be non-variables. Nevertheless, even though we did not intentionally remove weakvariability sources, our visual method might result in the rejection of some true variables at the end because of the low signal-to-noise ratio of the variables.^3 In Section 3.4.3, we show test results that alleviate these concerns for classifying weakvariability sources.

Table 2 shows the number of variables of each type 1) after the crossmatching, 2) after the visual examination, and 3) after the light-curve refining explained in Section 3.2. Although we maintained most of the subclasses of variable types defined from the OGLE catalogs, we merged some subclasses that do not have many sources. For instance, the subclass “Other” of CEPHs includes second-overtone (i.e., 2O), double-mode F/1O (i.e., fundamental-mode and first-overtone), double-mode 1O/2O, double-mode 1O/3O (i.e., third-overtone) and triplemode classical CEPHs. One of the EB subclasses, “Other”, also includes several types of eclipsing binaries. We also did not separate subclasses of T2CEPHs and DSCTs because of insufficient numbers.

The top panel of Fig. 4 shows the OGLE counterparts before the visual removal superposed on the coverage of the EROS- 2 LMC fields. The counterparts are only spread over the central region of the EROS-2 fields. About half of the region is

3 Signal-to-noise ratio here means the highest amplitude versus noise of a light curve.

Article number, page 3 of 18

A&A proofs: manuscript no. KimEROS2013

Fig. 3. EROS-2 light curves (top and middle) of two variable stars crossmatched with the OGLE RRLs. Top: raw light curves, middle: phase-folded light curves, left: one RRL variable included in the training set, and right: another RRL variable excluded from the training set. The x-axis of raw light curves is in the unit of Heliocentric Julian Date (HJD) - 2 450 000. We use this unit as the unit of x-axis for a raw light curve throughout this paper. Periods shown in the top panels are derived using the Lomb-Scargle algorithm (Lomb 1976). In the bottom two panels, we show the phase-folded OGLE light curves of the same RRLs. The periods of these light curves are taken from Soszyński et al. (2009b). Although the OGLE RRL at the bottom-right panel shows clear periodic signals, the crossmatched EROS-2 counterpart’s light curve (top right and middle right) does not show any variability, which is associated with blending with a nearby star. See text for details.

not overlapped by the OGLE counterparts. In addition, we show the crossmatched counterparts with the MACHO variables in the bottom panel of Fig. 4. We used the list of MACHO variables from Kim et al. (2011), which contains about 19k sources including RRLs, CEPHs, EBs, LPVs, and BVs. The MACHO variable study (Alcock 2001) provides one of the richest variable catalogs in terms of the number of variables and variable types along with the OGLE variable studies. As the panel shows, the MACHO variables also do not cover the entire EROS-2 fields. Thus it is clear that there are numerous variable stars that have never been detected by either the OGLE or the MACHO survey.

Note that the training set explained in this section is mainly based on the OGLE variable stars that are spread across the central region of the LMC. Thus it is possible that a classification model built on the training set might be biased to characteristics of the light curves in the central LMC area such as magnitudes, amplitudes, colors, and photometric uncertainties. Nevertheless, training individual classification models adapted to each EROS- 2 field’s characteristics is beyond the scope of this paper.

3.2. Refining light curve

To extract variability features, we used EROS-2 B_E-band light curves, which have better photometric accuracy and also more data points than R_E-band light curves. This is because the red camera was subject to more technical problems than the blue one during all campaigns. Before extracting variability features from the training set light-curves explained in the previous section, we refined each light curve as follows:

– We removed measurements with magnitudes higher than 22 or with photometric uncertainties higher than 1 magnitude. This cut removes many measurements of a light curve at the faint-end magnitude because such a light curve mainly consists of 99.999 magnitude values or 9.999 photometric uncertainty values, which indicates that the measurements are unreliable.

– We removed measurements by 3σ clipping (no iteration) about the mean, where σ is a standard deviation of the light curve. This cut is used to remove fluctuating data points that are occasionally caused by inaccurate photometric measurements. Nevertheless, the cut typically removes less than 5% of the data points, which does not significantly alter light curves.

Article number, page 4 of 18

Dae-Won Kim et al.: The EPOCH Project: I. Periodic variable stars in the EROS-2 LMC database

Table 2. Number of remaining variables after crossmatching, visual removal, and light-curve refining

Superclass Subclass After crossmatching After visual removal After refining Note (number) (number (%^a)) (number (%^a)) DSCT 1155 511 (44) 511 (44) CEPH fundamental (F) 1275 1275 (100) 1249 (98) first overtone (1O) 871 844 (97) 834 (96) Other 168 162 (96) 160 (95) RRL ab 8721 3434 (39) 3276 (38) c 2461 714 (29) 637 (26) d 511 179 (35) 172 (34) e 603 143 (24) 141 (23) EB EC 605 445 (74) 418 (69) contact ED 8615 1644 (19) 1592 (19) detached ESD 3409 1150 (34) 1109 (33) semi-detached ED+ESD 870 146 (17) 142 (16) detached/semi-detached Other 254 153 (60) 146 (58) LPV Mira AGB C 785 754 (96) 567 (72) carbon-rich Mira AGB O 329 329 (100) 324 (99) oxygen-rich OSARG AGB C 2119 1416 (67) 1135 (54) carbon-rich OSARG AGB O 22670 3368 (15) 3187 (14) oxygen-rich OSARG RGB C 264 57 (22) 46 (17) carbon-rich OSARG RGB O 32648 2046 (6) 1888 (6) oxygen-rich SRV AGB C 3889 3819 (98) 2507 (65) carbon-rich SRV AGB O 4482 4206 (94) 3672 (82) oxygen-rich T2CEPH 123 121 (98) 112 (91) BV 829 796 (96) 725 (88) QSO 256 180 (78) 161 (63) NonVar 4791 3681 (77) Total 97912 32683 (33) 28392 (29)

a ratio to the number of variables after crossmatching.

We then excluded light curves from the training set if

– there were fewer than 100 measurements.

– the estimated period was spurious, related to the solar day,

the moon phase, the sidereal months, and their multiples. We found spurious periods by examining a scatter plot of periods versus period S/N (e.g. see the top-left panel in Fig. 19) and a period histogram.

This reduced the number of light curves reduces from 32 683 to 28 392. Most of the excluded light curves were removed by the period criterion. This set of 28 392 light curves is the final training set.

3.3. Variability features

To identify variability, we used multiple features extracted from the light curves instead of the light curve themselves as the basis for classification. We tested more than 30 features and selected the best 22 features based on their “variable importance”, estimated using the random forest algorithm explained in Section 3.4.1. We found empirically that using more or fewer features than 22 did not improve classification results. Dubath et al.

(2011) also observed that using a large number of features, including inessential or even correlated features did not affect random forest classification results much.

A brief description of each feature is given in Table 3. Fig. 5 shows the estimated variable importance for these 22 features. For details of the definitions of the indices, see the appendix.

3.4. Random forest classification model

3.4.1. Architecture and training To train a classification model using the variability features extracted from the training set light-curves, we used the random forest classification method (Breiman 2001). This has been successfully applied for many astronomical classification and regression problems (e.g. Carliles et al. 2010; Dubath et al. 2011; Richards et al. 2011; Pichara et al. 2012). Random forest uses multiple decision trees (Quinlan 1993) and the bagging (Breiman 1996) to train a classification model. Each decision tree is trained using a subset of features that are randomly selected from all features (here the 22 variability features mentioned in the previous section). Random forest then chooses a class for a sample that has the most votes of the all decision trees. In principle, random forest does not need to do cross-

Article number, page 5 of 18

A&A proofs: manuscript no. KimEROS2013

Table 3. Variability features

Feature A brief description. For details, see the appendix. Period Period derived by the Lomb-Scargle algorithm Period S/N Signal-to-noise ratio of the derived period η Ratio of the mean of square of successive differences to the variance of data points η_{B−R} η over a B_E - R_E light curve ψ^η η over a phase-folded light curve η^e modified η B_E Mean magnitude of B_E band B_E − R_E Color. Difference of mean magnitude of B_E and R_E bands Q_{3−1} 3^{rd} quartile (75%) - 1^{st} quartile (25%) Q_{3−1|B−R} 3^{rd} quartile (75%) - 1^{st} quartile (25%) over a B_E - R_E light curve Cusum Range of cumulative sum ψ^{CS} Cusum over a phase-folded light curve σ Standard deviation γ_1 Skewness γ_2 Kurtosis J Stetson J index K Stetson K index K_{AC} Stetson K index derived over an autocorrelation function of a light curve R_{21} 2^{nd} to 1^{st} amplitude ratio derived using the Fourier decomposition R_{31} 3^{rd} to 1^{st} amplitude ratio derived using the Fourier decomposition ϕ_{21} Difference between 2^{nd} and 1^{st} phase derived using the Fourier decomposition ϕ_{31} Difference between 3^{rd} and 1^{st} phase derived using the Fourier decomposition

Notes: We used EROS B_E-band light curves (either raw- or phase-folded) to derive these features, except for J, Q_{3−1|B−R} and η_{B−R}, which needs both B_E- and R_E -band light curves. See the appendix for details.

validation to estimate the classification error because each tree is constructed based on the bootstrap sample from the training set, where two thirds of the samples are used to train the tree and the remaining one third of samples, which are out-of-bag (oob) samples, is used to estimate an error, which is an oob error. The process of constructing each decision tree is as follows:

1. Generate N light curves randomly selected from the training set with replacement, where N is the total number of light curves in the training set, which is called bootstrap aggregating (bagging). This sample is used to train the tree.

2. At each node, randomly select m features from the all features, where m < M. M is the total number of features. The m value is fixed during the training.

3. These randomly selected m features are used to split the node. At each node, every possible split is tested, and then a feature for the best split is chosen. The tree is grown to its full extent without pruning. Each leaf node of the tree returns a single sample.

4. Repeat t times the above processes, where t is the number of decision trees.

While training a random forest model, one needs to set two free parameters, t and m, which is the number of decision trees and the number of features, respectively. We briefly explain the parameter selection in the following section.

We can use random forest to estimate the variable importance relevant to classification as follows:

1. Train a normal random forest model, RF_{normal}. 2. Train another random forest model after randomly permuting values of a feature among the training set, RF_{permute}.

3. During the training processes, calculate differences in oob error between the trees from the RF_{normal} and the RF_{permute}. Average the differences over all trees and normalize the average differences by its standard deviation derived from the differences. This averaged and normalized difference is a measure of the importance of the feature.

Thus stronger features generally have higher variable importance values. The derived variable importance of the 22 variability features is given in Fig. 5.

Random forest results can be used to estimate class probabilities for each light curve based on a simple voting strategy,

P_{class}(i) = n_{class}(i) N , (1)

where P_{class} is the probability of a class for a sample, n_{class} is the number of trees that identify the sample as class, and N is the total number of trees. For each light curve, we accepted the class corresponding to the highest probability among probabilities of all classes. We did not modify the probability according to class population in the training set since it is not the true population.

3.4.2. Training a classification model and performance optimization

Although random forest can internally estimate the classification error, as mentioned in the previous section (oob error), we separated the training set mentioned in Section 3.1 into two sets of samples to 1) measure performance, and 2) find the best t (the number of trees) and m (the number of features). The samples consist of 50% of the training set (∼14 000 light curves) to train

Article number, page 6 of 18

Dae-Won Kim et al.: The EPOCH Project: I. Periodic variable stars in the EROS-2 LMC database

Fig. 4. EROS-2 sources (gray dots) crossmatched with the known OGLE (top) and MACHO (bottom) variable stars in the EROS-2 LMC fields. The rectangles in each panel show the EROS-2 fields. The integer numbers in the rectangles are the EROS-2 field IDs. The x- and y-axis is RA and Dec is in J2000.

the model and the remaining 50% to estimate the trained model’s classification performance. We call these two set S_1 and S_2. We assessed the classification performance using a weighted average of recall and precision by class size in the training set. The recall and precision are defined as

recall =

N_{T P} N_{T P} + N_{FN}

, precision =

N_{T P} N_{T P} + N_{FP}

, (2)

where N_{T P} is the number of the true positives, N_{FP} is the number of the false positives, and N_{FN} is the number of the false negatives. To select the best t and m, we trained a random forest model for all possible combinations of t and m with 20 ≤ t ≤ 400 and 5 ≤ m ≤ 21 with a step size of 20 and 2, respectively. We then applied each trained model to S_2 to measure the model’s performance. Finally, we chose the t and m with the best performance. Fig. 6 shows the classification performance for each combination of t and m. The classification performance through this parameter space is relatively stable, as shown in the figure.

Tables 4 and 5 show the performance of the trained models using the optimized parameters, t and m. In Table 4, we present the confusion matrix of the model trained with only superclasses (i.e., without considering subclasses of variable types). We see that recall and precision for each superclass is higher than 95%, and average recall and precision is about 99%. Only the T2CEPH class shows low recall and precision. This is because 1) the number of variables in this class is substantially

Fig. 5. Variable importance of the variability features as determined by the random forest algorithm considering the variable subclasses. Higher importance features are more relevant for classification than lower importance features. A brief summary of these features is given in Table 3.

Fig. 6. Classification performance according to the number of trees, t, and the number of features, m. Performance degrades when m > 14, which might be caused by overfitting of a classification model.

lower than that of the other classes, and 2) the variability characteristics of T2CEPHs are similar to other classes (i.e., sinusoidal pattern of the light curves). Table 5 shows the recall and precision of the model trained with the subclasses^4. The average recall and precision drop to 87%, not because of the misclassification between superclasses, but mainly because of the misclassification of subclasses within a superclass. This is not surprising since the classification of each subclass within a same superclass is harder than the separation of superclasses. It is also possible that the OGLE classification is not sufficiently accurate, espe-

4 Due to the length of the confusion matrix, we do not show it but just show the recall and precision for each class. The confusion matrix is available as supplementary material.

Article number, page 7 of 18

A&A proofs: manuscript no. KimEROS2013

Fig. 7. Example light curves of two EB variables with a high (left panel) and low probability (right panel). The two left (right) panels are light curves of a same star. The top panels are raw light curves and the bottom panels are phase-folded light curves. The light curve with a high probability shows much stronger and clearer transit signals than the other light curve.

Table 4. Confusion matrix of the random forest model without considering subclasses^a

Class DSCT RRL CEPH T2CEPH EB LPV BV QSO NonVar Recall (%) DSCT 253 1 1 99.2 RRL 3 2088 4 2 16 98.8 CEPH 10 1094 3 12 1 1 97.6 T2CEPH 8 37 10 1 66.1 EB 1 11 6 1652 20 14 96.9 LPV 1 6 6642 1 1 12 99.7 BV 2 353 1 6 97.5 QSO 1 2 71 7 87.7 NonVar 2 1 6 12 5 4 1812 98.4 Precision 97.7 99.0 98.4 86.0 96.9 99.5 97.5 92.2 97.8 98.6, 98.6^b (%) a Each row is a true class and each column is a predicted class. Bold numbers show the true positives. b Average weighted recall and precision by the proportion of classes in the training samples.

cially for EBs and LPVs, as the OGLE papers Soszyński et al. (2009a) and Graczyk et al. (2011) indicate.

In Fig. 7 we show two example EB light curves. The probability of being in the EB class for the light curve in the left panel is 1.0, while the probability for the light curve in the right panel is 0.38. As the figure clearly shows, the light curve with a high probability has a much stronger signal in the raw- and phasedfolded light curve than the one on the right. The estimated periods for EBs are probably half of the true periods, particularly when there is little difference between amplitudes of primary and secondary eclipses. However, it would not significantly affect the classification performance because the model is trained not only on period, but other variability features as well. In Fig. 8, we show the distribution of probability of related class for S_2 (probability, for short). About half of the light curves’ probabilities are higher than 0.9. Conversely, there are fewer samples with low probabilities. This is because we visually removed light curves with no or feeble variability when constructing the training set.

The final model is trained using the 22 variability features, the entire training set consists of 28 392 light curves (i.e., S_1+S_2) and all the variable subclasses, where t = 160 and m = 13. This model was used to select and classify periodic variable candidates from the EROS-2 database.

3.4.3. Evaluation of the trained model

As mentioned in Section 3.1, we removed 65 229 (i.e., 97 912 - 32 683; see Table 2) sources from the training set by visual examination. Thus it is possible that we accidentally excluded true variables with low-level variability. In this section, we assess the classification quality of the trained model for weak variability using these visually removed sources.

Article number, page 8 of 18

Dae-Won Kim et al.: The EPOCH Project: I. Periodic variable stars in the EROS-2 LMC database

Table 5. Recall and precision of the random forest model considering subclasses

Class Subclass Recall Precision (%) (%) DSCT 97.6 98.0 CEPH F 97.3 97.7 1O 91.1 91.6 Other 71.3 73.1 RRL ab 99.6 99.0 c 95.9 87.4 d 65.1 93.3 e 83.1 85.5 EB EC 52.6 70.1 ED 88.9 79.9 ESD 73.0 65.0 ED+ESD 5.6 50.0 Other 11.0 44.4 LPV Mira AGB C 88.3 86.5 Mira AGB O 82.1 86.9 OSARG AGB C 57.0 71.9 OSARG AGB O 80.8 76.1 OSARG RGB C 13.0 30.0 OSARG RGB O 84.4 83.4

SRV AGB C 88.2 85.3 SRV AGB O 84.4 84.9 T2CEPH 71.4 88.9 BV 96.1 97.2 QSO 92.5 91.4 NonVar 98.2 97.6 Average recall and precision^a 86.7 86.3

a Average weighted by the proportion of classes in the training samples.

We first refined these 65 229 light curves as explained in Section 3.2, which yielded 38 201 sources. Most of the light curves were removed by the period criterion. Fig. 9 shows histograms of variability features of 1) non-variables in the training set, 2) RRLs in the visually removed 38 201 sources, and 3) RRLs in the training set. The set of RRLs that were removed is almost entirely overlapped by the RRL training set, implying that this visual removal has not significantly biased the training set. Fig. 10 shows histograms of the variability features of LPVs. LPVs that were visually removed lie between the non-variables and the final LPV training set. Objects in the left part of the histogram for the removed LPVs have parameters similar to those of the non-variables in the training set, which means that they are probably also non-variables. The right half is similar to the LPVs in the training set, which indicates that they are probably weakly variable LPVs mistakenly excluded by the visual inspection (an inevitable consequence of trying to build a very clean training set). Nevertheless, as the figure shows, the training-set LPVs cover the right half of the histogram well. We have confirmed that other types of variables show a similar distribution to either Fig. 9 or 10.

We then applied the trained model to these 38 201 sources. Among these sources, 12 875 sources are classified as nonvariables and the remaining 25 326 sources are classified as variables. Fig. 11 shows the probability distribution of the variable sources. A relatively larger portion of sources has low probabilities than in Fig. 8. This is not surprising since these sources probably have weak variability and thus low probabilities. Table 6 shows recall and precision for superclass classification. The recall of CEPH is much worse than others. Most of the CEPHs are classified as RRL c type stars that generally show a similar variability pattern with CEPHs - slow increase and decrease of flux during its phase (i.e., sinusoidal). We visually examined these misclassified CEPHs and found that their light curves are not clearly distinguishable from RRLs. Nevertheless, the high recall and precision of other periodic variable classes indicates that the trained model is successful in classifying weak variability sources. We also show recall and precision for the subclass classification of these variables in Table 7. The recall and precision of EBs and LPVs are poorer than others, which might be associated with either 1) misclassification due to weak variability, or 2) incomplete OGLE subclass classification (e.g. see Soszyński et al. 2009a; Graczyk et al. 2011).

We visually examined the light curves with probabilities higher than 0.9 (see Fig. 11) and found that the majority of them show strong variability, but were mistakenly excluded during the

Article number, page 9 of 18

A&A proofs: manuscript no. KimEROS2013

Fig. 8. Cumulative histogram of probabilities of related class for S_2. There are more high-probability than low-probability light curves. About half of the light curves have probabilities higher than 0.9.

Table 6. Superclass recall and precision for the removed sources

Class Recall Precision (%) (%) DSCT 100.0 80.3 CEPH 20.7 37.5 RRL 94.7 98.6 EB 96.4 93.0 LPV 99.7 99.9

visual removal. We trained another classification model after including these high-probability sources into the training set to check whether or not these samples help improve the model performance. We found that the newly trained model showed almost identical performance to the original model.

In this section, we assessed the classification quality of the trained model for weak variability. Although some true variables might be mistakenly removed during the visual inspection because of the low level of variability, most of the removed sources are relatively well covered by the training set, as shown in Fig. 9 and 10. Moreover, Tables 6 and 7 show that the model has a fairly acceptable classification quality for such sources. Nevertheless, note that the goal of this work is to select variables from the 29 million EROS-2 sources where the majority of the sources are expected to be non-variables. Therefore minimizing possible false positives is the most critical task. As mentioned in Section 3.1, we observed a substantial decrease of classification performance without this visual removal.

4. Variable candidates from the EROS-2 LMC database

We refined all light curves as depicted in Section 3.2 from the entire EROS-2 LMC database^5, extracted 22 variability features from them, and applied the trained model. This yielded 150 115

5 About 50% of the EROS-2 light curves were removed by the criteria. Five sixths of them were removed by the period criterion.

Fig. 9. Histograms of three variability features, Stetson J, ψ^{CS} , and period S/N (from top to bottom). Each panel shows three histograms, each of which is a histogram of 1) non-variables (dotted line) in the training set, 2) the visually removed RRLs (dashed line), and 3) RRLs (solid line) in the training set. See text for details.

variable candidates. From these light curves, we removed light curves with B_E fainter than 20, which is around the limiting magnitude. 27 224 light curves were removed by the magnitude cut. We also visually examined some of the variable-candidate light curves and found that some light curves with a period S/N lower than 20 are likely false positives (i.e., non-variables). For instance, the top-left panel of Fig. 19 in the appendix shows a scatter plot of period and period S/N of the training-set light curves (symbols). The panel also shows a contour line of ∼550k field sources from the EROS-2 LMC database. The majority of the non-variable sources (gray circles) in the training set and the field sources have a period S/N lower than 20. Figs. 9 and 10 show the same distribution. Low-period S/N can be caused by large photometric uncertainties, relatively weak periodic signals, insufficient number of measurements, etc. Although not every source with B_E > 20 or period S/N < 20 is a non-variable, we removed all such sources to minimize the number of potential false positives.^6 5 657 light curves were removed by the period S/N cut. After this removal, the number of variable candidates is 117 234, which is about 0.44% of the total sources in the EROS- 2 LMC database. In Table 8, we show the number of variable candidates after these cuts.

Among these 117 234 variable candidates, we found that 58 069 variable candidates are previously known OGLE vari-

6 The training set light curves of variable sources show strong variability regardless of their B_E magnitudes or period S/N.

Article number, page 10 of 18

Dae-Won Kim et al.: The EPOCH Project: I. Periodic variable stars in the EROS-2 LMC database

Fig. 10. Histograms of three variability features, Stetson J, ψ^{CS} , and period S/N (from top to bottom). Each panel shows three histograms, each of which is a histogram of 1) non-variables (dotted line) in the training set, 2) the visually removed LPVs (dashed line), and 3) LPVs (solid line) in the training set. See text for details.

ables. We also crossmatched the 117 234 EROS-2 variable candidates with the known MACHO variables. The list of known MACHO variables is taken from Kim et al. (2011) and contains 19 097 variables. Among these 19 097 MACHO variables, 16 543 are crossmatched with the EROS-2 variable candidates. We excluded EROS-2 DSCT and T2CEPH candidates during the crossmatching because the list of the known MACHO variables does not have these classes. Table 8 shows the number of variable candidates of each type after removing the known OGLE and MACHO variables. Fig. 12 is a color-magnitude diagram of the new EROS-2 variable candidates. We transformed EROS- 2 bands B_E and R_E to the standard V Johnson and I Cousins broadband (Tisserand et al. 2009). Fig. 13 shows examples of phase-folded light curves of six new variable candidates. There is clear and strong variability in the phase-folded light curves. In Fig. 14, we show period histograms of each variable type. It is well-known that different types of periodic variable stars have different ranges of periods such as DSCTs: 0.02 - 0.25 days (Poleski et al. 2010), RRLs: 0.2 - 0.9 days (Alcock et al. 1996) and CEPHs: days to months (Soszyński et al. 2008a). We visually examined the two T2CEPHs with periods longer than 1 000 days and found that they might be misclassified LPVs. The probabilities of these two T2CEPHs are relatively low, 18% and 25%. The histogram of the EB periods in Fig. 14 shows two populations, one with periods shorter than 20 days, another with periods longer than 20 days. We confirmed that the shorter period EBs

Fig. 11. Cumulative histogram of probabilities of the visually removed sources that are identified as variable stars by the trained model. Compared with Fig. 8, there are more low-probability light curves.

Table 7. Subclass recall and precision for the removed sources

Superclass Subclass Recall Precision (%) (%) CEPH 1O 12.5 42.9 Other 0.0 0.0 RRL ab 93.3 99.4 c 90.1 87.3 d 70.6 86.0 e 80.2 74.1 EB EC 40.3 26.5 ED 85.6 75.4 ESD 43.0 56.1 ED+ESD 7.3 10.2 Other 0.0 0.0 LPV OSARG AGB C 82.7 11.5 OSARG AGB O 76.4 50.5 OSARG RGB C 15.8 0.4 OSARG RGB O 37.7 95.2 SRV AGB C 38.3 38.6 SRV AGB O 75.3 16.2

Notes: We do not show some subclasses (e.g. CEPH F) whose recall or precision we were unable to calculate because of the lack of the subclasses either in the OGLE classification or in the trained model’s classification.

are on the main sequence, while the longer period EBs are on the red giant branch, which is a known behavior (Graczyk et al. 2011). Fig. 15 shows the probabilities of the candidates. Most of DSCTs, RRLs, and CEPHs have probabilities higher than 90%. In contrast, many T2CEPHs, EBs, and LPVs have probabilities lower than 50%. In particular, about two thirds of EBs have probabilities lower than 50%, which is probably caused by ei-

Article number, page 11 of 18

A&A proofs: manuscript no. KimEROS2013

Table 8. Number of variable candidates selected from the EROS-2 LMC fields

Superclass Subclass C1^a C2^b DSCT 2481 1906 CEPH F 1993 246 1O 1527 318 Other 343 74 RRL ab 16407 3599 c 5367 1904 d 968 311 e 1636 793 EB EC 6120 5159 ED 13372 7216 ESD 13970 10627 ED+ESD 674 422 Other 11471 11138 LPV Mira AGB C 918 313 Mira AGB O 454 99 OSARG AGB C 3538 883 OSARG AGB O 15192 3992 OSARG RGB C 1015 217 OSARG RGB O 8863 3031 SRV AGB C 3884 1122 SRV AGB O 6712 1737 T2CEPH 329 178 Total 117234 55285

a After applying B_E ≤ 20 and period S/N ≤ 20 cuts.

b After additional removal of the known OGLE and MACHO variables.

ther misclassification within EB subclasses or misclassification between superclasses. Nevertheless, we visually examined these low-probability candidates and confirmed that almost all of them show variability in their light curves.

Figs. 16 to 18 show the relationships between features of each subclass of RRLs, CEPHs, and LPVs in the newly detected 55 285 variable candidates. We do not show EBs since they are mixed in most of the 2D-plane of variability features. This is not surprising since the subclass classification performance of EBs is relatively poor (see Table 5). Fig. 16 shows period and amplitude ratio, R_{21}, of the RRL variable candidates; see the appendix for details of R_{21}. Each subclass is shown in a different color and is distinguishable from each other, which is a known property of RRL variables (Soszyński et al. 2009b). Fig. 17 shows the period and R_{21} of CEPH variable candidates, and each subclass is again relatively well distinguishable. Fig. 18 displays the relation of period versus σ of the LPVs.

5. Summary

We presented the first result of the EPOCH project: the classification of periodic variable stars in the EROS-2 LMC lightcurve database. We first compiled the richest possible training set based mainly on the previously known OGLE variable stars. We chose 22 variability features based on the variable importance estimated by the random forest algorithm and then calculated

Fig. 12. Color-magnitude diagram of the newly detected 55 285 variable candidates. DSCTs: red dots, RRLs: blue dots, EBs: gray dots, LPVs: green dots, CEPHs: yellow circles and T2CEPHs: magenta circles. The magnitudes are not corrected for interstellar extinction. The arrow represents average interstellar extinction of E(V − I) = 0.09 for the LMC (Haschke et al. 2011). The typical distance modulus to the LMC is 18.5 magnitude (Tisserand et al. 2009). A color version of this figure is available online.

the features using the visually examined training set. We then trained a random forest classification model using these variability features. We applied the model to the 29 million EROS-2 LMC sources and detected 117 234 variable candidates. The catalog of the variable candidates containing EROS IDs, RA, Dec, colors (i.e., B_E − R_E), magnitudes (i.e., B_E), periods, period S/N, probabilities and crossmatched OGLE/MACHO information is available at http://stardb.yonsei.ac.kr and at the CDS. Note that the catalog contains all 150 115 variable candidates without removal of the faint sources or low-period S/N sources mentioned in Section 4.

The classification quality of any supervised machinelearning methods depends on the richness of the training set and informativeness of the features on which a classification model is trained. In this work, we used previously known OGLE variable sources to build a training set. Thus a classification model would not be feasible for selecting and classifying variable types that do not exist in the OGLE variable source catalogs. In future works, we will consider adding more variable sources of different types to increase the completeness of the training set. In addition, we visually removed sources without variability while building the training set, which might result in an incomplete training set because of unintended removal of weak-variability sources. Although we showed that the trained model was able to classify both strong and weak variability sources, additional investigation on an enhanced training set would be useful to increase classification quality. We used 22 variability features of the highest variable importance estimated with the random forest method. We did not see any noticeable improvements by using more or fewer features. Nevertheless, it would be interesting to perform a comprehensive feature selection based on a variety of methods (e.g. see Guyon & Elisseeff 2003 and references therein) to find irrelevant and/or highly correlated features that could be removed without detriment to the classification quality.

Article number, page 12 of 18

Dae-Won Kim et al.: The EPOCH Project: I. Periodic variable stars in the EROS-2 LMC database

Fig. 13. Examples of phase-folded light curves of six new variable candidates.

In future works, we will apply a similar classification approach to the one presented for the EROS-2 SMC, Galactic bulge, and spiral arm databases to select and classify variable candidates.

Acknowledgements

The EROS-2 project was funded by the CEA and the CNRS through the IN2P3 and INSU institutes. JBM acknowledges financial support from "Programme National de Physique Stellaire" (PNPS) of CNRS/INSU, France. Work at Yonsei was supported by the NRF grant 2012R1A1A2006924. The analysis in this paper has been performed using the Odyssey cluster supported by the FAS Research Computing Group at Harvard.

References

Alard, C. & Lupton, R. H. 1998, ApJ, 503, 325 Alcock, C., Allsman, R. A., Axelrod, T. S., et al. 1996, AJ, 111, 1146 Alcock, C., e. a. 2000, ApJ, 542, 281 Alcock, C., e. a. 2001, Variable Stars in the Large Magellanic Clouds, VizieR Online Data Catalog (http://vizier.u-strasbg.fr/viz-bin/VizieR?-source=II/247)

Ansari, R. 1996, Vistas in Astronomy, 40, 519 Ansari, R. & EROS Collaboration. 2001, in Astronomical Society of the Pacific Conference Series, Vol. 237, Gravitational Lensing: Recent Progress and Future Go, ed. T. G. Brainerd & C. S. Kochanek, 235 Beaulieu, J.-P., de Wit, W. J., Lamers, H. J. G. L. M., et al. 2001, A&A, 380, 168 Beaulieu, J. P., Grison, P., Tobin, W., et al. 1995, A&A, 303, 137 Breiman, L. 1996, Machine Learning, 24, 123 Breiman, L. 2001, Machine Learning, 45, 5 Carliles, S., Budavári, T., Heinis, S., Priebe, C., & Szalay, A. S. 2010, ApJ, 712, 511 Carretta, E., Gratton, R. G., Clementini, G., & Fusi Pecci, F. 2000, ApJ, 533, 215 Catelan, M. 2009, Astrophysics and Space Science, 320, 261 Dubath, P., Lecoeur, I., Rimoldini, L., et al. 2012, in IAU Symposium, Vol. 285, IAU Symposium, ed. E. Griffin, R. Hanisch, & R. Seaman, 309–311 Dubath, P., Rimoldini, L., Süveges, M., et al. 2011, MNRAS, 414, 2602 Ellaway, P. 1978, Electroencephalography and Clinical Neurophysiology, 45, 302 Feast, M. W. & Catchpole, R. M. 1997, MNRAS, 286, L1 Feast, M. W., Glass, I. S., Whitelock, P. A., & Catchpole, R. M. 1989, MNRAS, 241, 375 Freedman, W. L., Madore, B. F., Gibson, B. K., et al. 2001, ApJ, 553, 47 Graczyk, D., Soszyński, I., Poleski, R., et al. 2011, Acta Astronomica, 61, 103 Grison, P. 1994, A&A, 289, 404 Guyon, I. & Elisseeff, A. 2003, Journal of Machine Learning Research, 3, 1157 Haschke, R., Grebel, E. K., & Duffau, S. 2011, AJ, 141, 158 Hubble, E. & Humason, M. L. 1931, ApJ, 74, 43

Article number, page 13 of 18

A&A proofs: manuscript no. KimEROS2013

Fig. 14. Period histograms of the new variable candidates. From top to bottom: DSCTs, RRLs, CEPHs, T2CEPHs, EBs, and LPVs. Each type of variable stars has a different period distribution.

Keller, S. C., Bessell, M. S., Cook, K. H., Geha, M., & Syphers, D. 2002, AJ, 124, 2039 Kim, D.-W., Protopapas, P., Byun, Y.-I., et al. 2011, ApJ, 735, 68 Kim, D.-W., Protopapas, P., Trichas, M., et al. 2012, ApJ, 747, 107 Knapp, G. R., Pourbaix, D., Platais, I., & Jorissen, A. 2003, A&A, 403, 993 Kozlowski, S., Onken, C. A., Kochanek, C. S., et al. 2013, ArXiv e-prints Lemaître, G. 1927, Annales de la Societe Scietifique de Bruxelles, 47, 49 Lomb, N. R. 1976, Ap&SS, 39, 447 Marquette, J. B., Beaulieu, J. P., Buchler, J. R., et al. 2009, A&A, 495, 249 Oort, J. H. & Plaut, L. 1975, A&A, 41, 71 Petersen, J. O. 1986, A&A, 170, 59 Pichara, K., Protopapas, P., Kim, D.-W., Marquette, J.-B., & Tisserand, P. 2012, MNRAS, 427, 1284 Poleski, R., Soszyński, I., Udalski, A., et al. 2010, Acta Astronomica, 60, 1 Quinlan, J. R. 1993, C4.5: programs for machine learning (San Francisco, CA, USA: Morgan Kaufmann Publishers Inc.)

Richards, J. W., Starr, D. L., Butler, N. R., et al. 2011, ApJ, 733, 10 Riess, A. G., Macri, L., Casertano, S., et al. 2011, ApJ, 730, 119 Scargle, J. D. 1982, ApJ, 263, 835 Shin, M., Sekora, M., & Byun, Y. 2009, MNRAS, 400, 1897 Shin, M.-S., Yi, H., Kim, D.-W., Chang, S.-W., & Byun, Y.-I. 2012, AJ, 143, 65 Soszyński, I., Poleski, R., Udalski, A., et al. 2008a, Acta Astronomica, 58, 163 Soszyński, I., Udalski, A., Szymañski, M. K., et al. 2009a, Acta Astronomica, 59, 239 Soszyński, I., Udalski, A., Szymański, M. K., et al. 2008b, Acta Astronomica, 58, 293 Soszyński, I., Udalski, A., Szymański, M. K., et al. 2009b, Acta Astronomica, 59, 1

Fig. 15. Probability histograms of the new variable candidates. Although most of DSCTs, RRLs, and CEPHs show a probability higher than 90%, a relatively large potion of candidates of T2CEPHs, EBs, and LPVs show a probability lower than 0.9, which might be caused by misclassification within or between superclasses.

Soszyński, I., Udalski, A., Szymański, M. K., et al. 2013, Acta Astronomica, 63, 21 Spano, M., Mowlavi, N., Eyer, L., et al. 2011, A&A, 536, A60 Stetson, P. B. 1996, PASP, 108, 851 Storm, J., Gieren, W., Fouqué, P., et al. 2011, A&A, 534, A94 Tisserand, P., Le Guillou, L., Afonso, C., et al. 2007, A&A, 469, 387 Tisserand, P., Marquette, J. B., Beaulieu, J. P., et al. 2004, A&A, 424, 245 Tisserand, P., Wood, P. R., Marquette, J. B., et al. 2009, A&A, 501, 985 Udalski, A., Kubiak, M., & Szymanski, M. 1997, Acta Astronomica, 47, 319 Vivas, A. K., Zinn, R., Andrews, P., et al. 2001, ApJ, 554, L33 von Neumann, J. 1941, Ann. Math. Statist., 12, 367

Appendix

In this appendix, we explain each variability feature that we used to train the classification model. Q_{3−1|B−R}, ψ^{CS} , ψ^η, η_{B−R}, and η^e have been developed for this work. Some other features were developed and/or used in other works such as Shin et al. (2009), Kim et al. (2011), Kim et al. (2012), Pichara et al. (2012) and Shin et al. (2012).

– Period and period S/N

Article number, page 14 of 18

Dae-Won Kim et al.: The EPOCH Project: I. Periodic variable stars in the EROS-2 LMC database

Fig. 16. Period versus R_{21} for the new variable candidates of RRL type. RR ab: black circles, RR c: cyan circles, RR d: red circles and RR e: blue circles. The vertical blanks are attributed to spurious periods. A color version of this figure is available online.

Fig. 17. Period versus R_{21} for the new variable candidates of CEPH type. F: black circles, 1O: cyan circles, and others: red circles. A color version of this figure is available online.

In the top-left panel of Fig. 19, we show the period versus period S/N. Most of the variable types are grouped in different regions. For instance, LPVs (magenta x) have longer periods than others, such as RRLs, EBs, CEPHs, and DSCTs. The period was derived using the Lomb-Scargle algorithm (Lomb 1976) and is the highest peak in the periodogram. We define the signal-to-noise ratio (S/N) of the highest peak as S/N = max(p_{LS} ) − p̄_{LS} σ_{pLS}

, (3)

where p_{LS} is power of all frequencies in the periodogram, max is the maximum value, p̄_{LS} is a mean power, and σ_{pLS} is a standard deviation. Although the S/N of a peak (Scargle

Fig. 18. Period versus σ for the new variable candidates of LPV type. OSARG AGBs: red circles, OSARG RGBs: blue circles, SRV AGBs: cyan circles and Mira AGBs: magenta circles. The carbon-rich LPVs (top panel) show relatively longer periods than the oxygen-rich LPVs (bottom panel) (Soszyński et al. 2009a). Mira LPVs have larger amplitude than other LPVs, which is a known property of Mira variables (Soszyński et al. 2009a, 2013). The vertical lines at longer periods are caused by a sparse sampling of the periodogram derived by the Lomb- Scargle method. A color version of this figure is available online.

1982) is generally defined as

S/N = max(p_{LS} ) p̄_{LS}

, (4)

we used the alternative definition since we empirically found that σ_{pLS} of peridograms of EROS-2 light curves are relatively large, which could be attributed to noise in the light curves such as systematic trends and high photometric uncertainty. The top-left panel of Fig. 19 shows that the majority of non-variables (gray circles) and the field sources (contour line) have a lower period S/N than other variables. – η η measures the degree of trends (e.g. monotonic increase or decrease of flux in a long-term baseline) (von Neumann 1941). η is defined as

η = 1 (N − 1) σ^2

N−1� i=1 (m_{i+1} − m_i)^2, (5)

where N is the total number of measurements of a light curve, σ is the standard deviation, m is the magnitude, and i is the index of time. η is known to be useful to separate light curves with long-term variation, as shown in the bottom-right panel of Fig. 19.

– Color and magnitude Color and magnitude are powerful indices for variable separation because different variable types are generally placed at different regions in a color-magnitude diagram (CMD). The CMD of the training set is shown in the top-right panel of Fig. 19. Although there is some overlap between classes, some classes are clearly distinguishable in the CMD, for example, LPVs.

Article number, page 15 of 18

A&A proofs: manuscript no. KimEROS2013

– Q_{3−1}

Q_{3−1} is the difference between the third quartile, Q_3, and the first quartile, Q_1, of a raw light curve. Q_1 is a split between the lowest 25% and the highest 75% of data. Q_3 is a split between the lowest 75% and the highest 25% of data.

– Cusum

Cusum is the range of a cumulative sum (e.g. see Ellaway 1978) of a light curve and is defined as

Cusum = max(S ) − min(S )

S_l = 1 N σ l� i=1 (m_i − m̄), (6)

where max (min) is the maximum (minimum) value of S and l = 1, 2, . . . , N. m̄ is a mean magnitude. Cusum is generally high for light curves with long-term variability such as LPVs, BVs, and QSOs, while it is relatively low for light curves of short-periodic variables and non-variables (Kim et al. 2011).

– Q_{3−1|B−R} and ψ^{CS}

Q_{3−1|B−R} and ψ^{CS} are not the features derived from a raw light curve but the features derived from a B_E − R_E light curve, Q_{3−1|B−R}, and from a phase-folded light curve, ψ^{CS} . We generated a B_E − R_E light curve using only the simultaneous measurements from B_E and R_E . If a variable star’s flux variability is achromatic, the generated B_E − R_E light curve follows the normal distribution (i.e., Gaussian noise). Otherwise it would show a certain variability in the B_E − R_E light curve.

ψ^{CS} is the range of the cumulative sum (Cusum) of a phasefolded light curve. A phase-folded light curve is generated using the period estimated from the Lomb-Scargle method. For relatively short-period variables such as DSCTs, RRLs, CEPHs, and EBs, a phase-folded light curve would have a different shape from a raw light curve and thus embrace different variability characteristics. In the bottom-left panel of Fig. 19, we show the scatter plot of Q_{3−1|B−R} versus ψ^{CS} of short-period variables including DSCTs, RRLs, CEPHs, and EBs. The short-period variables are relatively well distinguishable. We do not show other types of variables because they are spread across the plane.

– ψ^η

ψ^η is the η index calculated from the phase-folded light curve. Dubath et al. (2011) used a conceptually identical feature with ψ^η, which they termed P2p scatter.

– η_{B−R}

This is an η index calculated from the B_E − R_E light curve. – η^e

Although η is a powerful index for quantifying variability characteristics of a light curve, it does not take into account unequal sampling. Thus we define η^e as

η^e = w̄ (t_{N−1} − t_1)^2

�_{N−1i=1} w_i (m_{i+1} − m_i)^2

σ^2 Σ^{N−1}_{i=1} w_i

w_i = 1 (t_{i+1} − t_i)^2 , (7)

where t is the measurement epoch, t_{i+1} > t_i, and w̄ is the mean value of w_i. The right panel in Fig. 20 shows the η^e histogram of RRLs, CEPHs, and EBs. Although the separation between the classes is not perfect, CEPHs are clearly distinguishable from others. We designed η^e considering different sampling rates and baselines between light curves, which is useful in some cases such as shown in Fig. 20 and also in the bottom-right panel of Fig. 19. Additional investigation, however, would be necessary to examine detailed characteristics of η^e.

– σ, γ_1 and γ_2

σ is a standard deviation, γ_1 is a skewness and γ_2 is a kurtosis of a light curve. γ_1 and γ_2 are defined as

γ_1 = N (N − 1)(N − 2) N� i=1 ( m_i − m̄ σ )^3

γ_2 =

N(N + 1) (N − 1)(N − 2)(N − 3) N� i=1 ( m_i − m̄ σ )^4 − 3(N − 1)^2 (N − 2)(N − 3) ,

(8)

– J and K

J is a Stetson J index (Stetson 1996), which is calculated based on simultaneous measurements from light curves in two bands, p and q, of the same star. It is defined as

J = 1 N N� i=1 sign(P_i) � |P_i|

P_i = δ_p(i) δ_q(i)

δ_p(i) = � N N − 1 m_{p,i} − m̄ σ_{p,i} ,

(9)

where N is the total number of measurements, i is an index for each measurement, and sign(P_i) is the sign of P_i. σ_{p,i} is the standard error of i_{th} measurement of band p. In case of the EROS-2 database, p and q indicate B_E and R_E bands. Stetson K is calculated using a single band light curve as

K = 1 √ N �_{Ni=1}

|δ(i)| �_N

i=1 δ(i)^2

, (10)

A pure sinusoid signal has K = 0.900 and Gaussian distribution has K = 0.798.

– K_{AC}

K_{AC} is Stetson K index calculated over the autocorrelation function of a light curve. This feature is useful to separate long- or non-periodic variables including QSOs from periodic variables (see Kim et al. 2011 for details).

– R_{21}, R_{31}, ϕ_{21}, and ϕ_{31} These features are derived using the Fourier decomposition (Petersen 1986; Grison 1994). R_{k1} is an amplitude ratio and ϕ_{k1} is a phase difference, which is defined as

R^2_{k1} =

A^2_k + B^2_k

A^2_1 + B^2_1

(11)

ϕ_{k1} = ϕ_k − kϕ_1, where ϕ_k = tan^{−1}(−

B_k A_k

). (12)

Article number, page 16 of 18

Dae-Won Kim et al.: The EPOCH Project: I. Periodic variable stars in the EROS-2 LMC database

To calculate A_k and B_k, we adopted the Grison model-fitting procedure (Grison 1994), which first constructs a zero-mean light curve and then fits a Fourier series, defined as M� i=1 [A_icos(i 2π P t) + B_i sin(i 2π P t)], (13)

where M is the number of series to fit, P is the derived period from the Lomb-Scargle method, and t is the time epoch. The features R_{k1} and ϕ_{k1} can distinguish different shapes of light curves and thus are useful to separate subclasses of shortperiod variables such as CEPHs (Beaulieu et al. 1995).

Article number, page 17 of 18

A&A proofs: manuscript no. KimEROS2013

Fig. 19. 2D scatter plots of variability features of the training set explained in Section 3.1. DSCTs: black squares, RRLs: green x’s, CEPHs: red x’s, EBs: blue x’s, T2CEPHs: yellow squares, LPVs: magenta x’s, QSOs: red squares, BVs: cyan squares, and NonVars: grey crosses. From left to right, clockwise: period versus period S/N, B_E − R_E (i.e., color) versus B_E band magnitude, η versus η^e, and ψ^{CS} versus Q_{3−1|B−R}. The contour line shows spatial distribution of about 550k field sources. To generate the contour line, we built a 2D histogram of the field sources and then used the counts in each 2D-bin. The figure shows the two contour levels of 100 (thick gray line) and 1000 (thick black line). The majority of these field sources are probably non-variables. Different variable classes are separately grouped in the 2D space of variability features. We plot only one out of ten samples from the training set for better legibility of the figure. See the text for details. A color version of this figure is available online.

Fig. 20. Histogram of η (left panel) and η^e (right panel) of RRLs (dashed), CEPHs (solid), and EBs (dotted). Using η^e, CEPHs are distinguishable from the other two classes.

Article number, page 18 of 18