arXiv:1405.4639v1 [astro-ph.SR] 19 May 2014

Astronomy & Astrophysics manuscript no. afuente-def © ESO 2017 August 7, 2017

The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Chemical similarities with Orion KL^⋆

A. Fuente^1, J. Cernicharo^2, P. Caselli^3, C. McCoey^4, D. Johnstone^{5,6,7}, M. Fich^4, T. van Kempen^8, Aina Palau^9, U.A. Yıldız^{10}, B. Tercero^2, and A. López^2

1 Observatorio Astronómico Nacional (OAN,IGN), Apdo 112, E-28803 Alcalá de Henares (Spain) e-mail: a.fuente@oan.es 2 Instituto de Ciencia de Materiales de Madrid (ICMM) C/Sor Juana Inés de la Cruz N3, Cantoblanco, 28049 Madrid, Spain 3 Max Planck Institute for Extraterrestrial Physics, Postfach 1312, 85741 Garching, Germany 4 Department of Physics and Astronomy, University of Waterloo, Waterloo, Ontario, N2L 3G1, Canada 5 Department of Physics & Astronomy, University of Victoria, Victoria, BC, V8P 1A1, Canada 6 National Research Council of Canada, Herzberg Institute of Astrophysics, 5071 West Saanich Road, Victoria, BC, V9E 2E7, Canada 7 Joint Astronomy Centre, 660 North A’ohoku Place, University Park, Hilo, HI 96720, USA 8 Leiden Observatory, Leiden University, P.O. Box 9513, 2300 RA Leiden, Netherlands 9 Centro de Radioastronomía y Astrofísica, Universidad Nacional Autónoma de México, P.O. Box 3-72, 58090 Morelia, Michoacán, México 10 Jet Propulsion Laboratory, California Institute of Technology, 4800 Oak Grove Drive, Pasadena CA, 91109, USA

Preprint online version: August 7, 2017

ABSTRACT

Context. This paper is dedicated to the study of the chemistry of the intermediate-mass (IM) hot core NGC 7129 FIRS 2, probably the most compact warm core found in the 2 to 8 M_⊙ stellar mass range.

Aims. Our aim is to determine the chemical composition of the IM hot core NGC 7129 FIRS 2, providing new insights on the chemistry of hot cores in a more general context.

Methods. NGC 7129 FIRS 2 (hereafter, FIRS 2) is located at a distance of 1250 pc and high spatial resolution observations are required to resolve the hot core at its center. We present a molecular survey from 218200 MHz to 221800 MHz carried out with the IRAM Plateau de Bure Interferometer (PdBI). These observations were complemented with a long integration single-dish spectrum taken with the IRAM 30m telescope in Pico de Veleta (Spain). We used a Local Thermodynamic Equilibrium (LTE) single temperature code to model the whole dataset.

Results. The interferometric spectrum is crowded with a total of ≈300 lines from which a few dozens remain unidentified yet. The spectrum has been modeled with a total of 20 species and their isomers, isotopologues and deuterated compounds. Complex molecules like methyl formate (CH_3OCHO), ethanol (CH_3CH_2OH), glycolaldehyde (CH_2OHCHO), acetone (CH_3COCH_3), dimethyl ether (CH_3OCH_3), ethyl cyanide (CH_3CH_2CN) and the G conformer of ethylene glycol (aGg’-(CH_2OH)_2) are among the detected species. The detection of vibrationally excited lines of CH_3CN, CH_3OCHO, CH_3OH, OCS, HC_3N and CH_3CHO proves the existence of gas and dust at high temperatures. In fact, the gas kinetic temperature estimated from the vibrational lines of CH_3CN, ∼405^{+100}_{−67} K, is similar to that measured in massive hot cores. Our data allow an extensive comparison of the chemistry in FIRS 2 and the Orion hot core.

Conclusions. We find a quite similar chemistry in FIRS 2 and Orion. Most of the studied fractional molecular abundances agree within a factor of 5. Larger differences are only found for the deuterated compounds D_2CO and CH_2DOH and a few molecules (CH_3CH_2CN, SO_2, HNCO and CH_3CHO). Since the physical conditions are similar in both hot cores, only different initial conditions (warmer pre-collapse and collapse phase in the case of Orion) and/or different crossing time of the gas in the hot core can explain this behavior. We discuss these two scenarios.

Key words. astrochemistry – stars:formation – ISM: molecules – ISM: individual (NGC 7129 FIRS 2)

1. Introduction

Intermediate-mass young stellar objects (IMs) are the precursors of stars in the 2−8 M_⊙ mass range (Herbig Ae/Be stars). They share some characteristics with massive young stellar objects (clustering, PDR) but they are more common than the more massive stars and therefore they can be found closer to

Based on observations carried out with the IRAM Plateau de Bure Interferometer. IRAM is supported by INSU/CNRS (France), MPG (Germany), and IGN (Spain).

the Sun (d<1 kpc), which allows determination of the physical and chemical structure of their envelopes at similar spatial scales as can be done for low mass protostars. From a chemical point of view, IMs are interesting because they constitute the link between the low-mass and high-mass ranges, covering an intermediate range of luminosities, densities and temperatures.

Hot molecular cores are compact (<0.05 pc) objects with high temperatures (>100 K) and densities (n(H_2)> 10^6 cm^{−3}), which are characterized by a very rich chemistry of complex organic molecules (COMs). In fact, the prototype of massive

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

hot core, that associated with Orion KL, hosts one of the richest molecular chemistry observed in the interstellar medium (Blake et al. 1987; Beuther et al. 2005, 2006; Tercero et al. 2010. 2011, 2013; Motiyenko et al. 2012, Cernicharo et al. 2013). COMs have also been detected, coming from the inner regions of a few low-mass protostars, the so called hot corinos (IRAS 16293-2422: Cazaux et al. 2003, Bottinelli et al. 2004a, Pineda et al. 2012; NGC 1333 IRAS 2A: Jørgensen et al.2005, 2007; NGC1333-IRAS 4AB: Bottinelli et al. 2004b, Bottinelli et al. 2007). These regions have smaller sizes (∼150 AU) and lower temperatures (∼100 K). Although high sensitivity interferometric data on hot cores and corinos are still scarce and the comparison is difficult, there is some general consensus that hot corinos are richer in O-bearing molecules like CH_3OCHO, CH_3CHO, CH_3OCH_3 or HCOOH, and poorer in N-bearing compounds. Furthermore, large abundances of deuterated molecules and large deuterium fractions are only associated with hot corinos (Vastel et al. 2003; Parise et al. 2004; Demyk et al. 2010).

A handful of well studied hot cores exist in the IM range: NGC 7129 FIRS 2 (Fuente et al. 2005a, hereafter FU05), IC 1396 N (Neri et al. 2007, Fuente et al. 2009), IRAS 22198+6336 (Sánchez-Monge et al. 2010, Palau et al. 2011), AFGL 5142 (Palau et al., 2011). The sizes of these IM hot cores range from ∼130 AU (IRAS 22198) to ∼900 AU (NGC 7129) and their chemistries present some differences. FU05 proposed that IM hot cores, like hot corinos, are richer in H_2CO and HCOOH relative to CH_3OH than massive hot cores, and they did not find any variation in the CH_3CN/CH_3OH abundance ratio across the stellar range. Palau et al. (2011) studied the chemistry of IRAS 22198+6336 and AFGL 5142 and concluded that these IM hot cores are richer in oxygenated molecules with two or more CH_{2/3}-groups than hot corinos but poorer in Nbearing molecules than massive hot cores. As yet, the number of studied objects is very low and the derived column densities have large uncertainties.

In this paper, we present a 4 GHz interferometric frequency survey towards the hot core NGC 7129 FIRS 2 (hereafter, FIRS 2) that, with a luminosity of ∼500 L_⊙, lies near the middle of the IM luminosity range. FIRS 2 is a prototypical young IM protostar, it is associated with energetic outflows (Fuente et al. 2001) and presents clear signs of CO depletion and enhanced deuterium fractionation when observed with single-dish telescopes (scales of ∼10000 AU) (Fuente et al. 2005b; Alonso-Albi et al. 2010). It is located at a distance of 1250±50 pc from the Sun (Shevchenko & Yakubov 1989) and FU05 detected a compact hot core at its center. FIRS 2 was observed with Herschel within the Water In Star-forming regions (WISH) key program (van Dishoeck et al. 2011) and it is one of the best known IM protostars with a quite complete set of data at both millimeter and far-IR wavelengths (Johnstone et al. 2010, Fich et al. 2010, Fuente et al. 2012). This source and IRAS 22198+6336 are the only hot cores without clear signs of clustering which suggests that their luminosity could come from a single binary system (Palau et al. 2013).

2. Observations

The interferometric observations were carried out with the Plateau de Bure Interferometer (PdBI) in its CD configuration during August and November, 2012. This configuration provided an angular resolution of 1.43^{′′}×1.26^{′′} PA 144^∘ (∼1870 AU×1647 AU at the distance of FIRS 2) at the central frequency. The 1 mm receivers were tuned at 219.360 GHz which allowed the simultaneous imaging of the C^{18}O 2→1 and

13CO 2→1 lines, both within the ∼4 GHz receiver’s band. The narrow 40 MHz correlator units were used to sample the C^{18}O and^{13}CO lines at the high spectral resolution of 40 kHz. The wide band correlator WideX sampled the whole 4 GHz bandwidth with a spectral resolution of ∼2 MHz. MWC 349 was used as flux calibrator (1.92 Jy) and the rms in each Widex channel, 4−6 mJy/beam (∼ 0.058-0.087 K).

The interferometric observations were complemented with single-dish observations using the 30m telescope and the same frequency setup. These observations were done in December 2012 and the achieved rms(T^∗_a) was ∼0.012 K (0.09 Jy) in a channel of ∼1.953 MHz. Therefore, the 30m observations are ∼15 times less sensitive than the PdB images. The telescope was pointed towards the phase center of the interferometric observations: 21^h43^m01.^s7, +66^∘03^′23.^{′′}6 (J2000). Forward and main beam efficiencies are 0.92 and 0.63, respectively. The selected intensity scale is main beam temperature.

This paper is dedicated to the analysis of the chemical complexity revealed by the WideX data towards the mm continuum source.

3. Results

3.1. Continuum maps

The high density of lines detected made it impossible to accurately measure the continuum flux from the low spectral resolution WideX data. Instead, we used the empty emission channels around the C^{18}O and^{13}CO lines measured at higher spectral resolution using the 40 MHz correlator units to determine the continuum flux. As expected, the continuum flux was slightly different at 219.560 GHz and 220.398 GHz. We derived two continuum maps at 219.560 GHz and 220.299 GHz. Fitting the visibilities we obtained the position of the compact source: 21^h43^m01.^s67, +66^∘03^′23.^{′′}7, i.e, offset by −0.17^{′′} in right ascension from our phase center. The measured fluxes are 0.37(0.01) Jy at 219.560 GHz and 0.38(0.01) at 220.398 GHz, respectively. In FU05, we determined a mm emission spectral index of 2.56 based on the continuum images at 86 GHz and 230 GHz. The new fluxes at 219.6 GHz and 220.4 GHz are consistent with these results taking into account the uncertainty of 10% in the absolute flux calibration.

3.2. Molecular Lines

In Figs. A.1-4 we show the WideX spectra towards the continuum peak. The continuum image at 219.560 GHz was subtracted from the spectral maps before the cleaning process. This subtraction is not perfect since the continuum presents a smooth slope across the observed bandwidth, but it is good enough for our current detection goals.

The spectrum towards the compact source is crowded with lines, typical of those found in massive hot cores. In order to estimate the flux that the interferometer is missing, we compared the PdBI spectrum with that obtained with the 30m telescope. In Table 1 we show the list of all the lines detected with both telescopes and the fraction of flux recovered using the PdBI. Note that only the H_2CO, CH_3OH, SO, C^{18}O and^{13}CO lines are missing a significant fraction of their fluxes when observed with the PdBI. The emission of OCS, HNCO, CH_3CN and HC_3N comes mainly from the hot core although 20% of the flux of the lowest energy HNCO line is missing. This is also consistent with the spatial distribution as observed with the PdBI. In Fig. 1, we show the integrated intensity images of some of the more intense

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Table 2. Results of the rotational diagram analysis^1

Species T_{rot} (K) N (cm^{−2}) R^2 HNCO 260^{+4}_{−5} 1.6^{+0.1}_{−0.1}×10^{15} 0.99 CH_3CN ν=0^3 905^{+250}_{−161} 1.6^{+0.2}_{−0.2}×10^{15} 0.90 CH_3CN ν_8=1 405^{+100}_{−67} 9.4^{−3.1}_{+4.6}×10^{14} 0.81 CH_3OCHO ν_t=0,1 265^{+139}_{−69} 2.8^{+1.9}_{−0.8}×10^{16} 0.60 CH_2DOH 157^{+15}_{−13} 1.4^{+0.3}_{−0.3}×10^{16} 0.99 aGg’-(CH_2OH)_2 145^{+37}_{−25} 2.0^{+0.3}_{−0.3}×10^{15} 0.92

1Beam filling solution.^2Correlation coefficient of the least square fitting.^3This fit was not finally used in the model because the detection of the^{13}C isotopologue showed that the lines are optically thick.

lines. Only^{13}CO, C^{18}O and SO present large scale structure. In all the other molecules the emission is point-like at the angular resolution of our observations.

4. Line identification and rotational diagrams

For line identification we used José Cernicharo’s personal catalogue which is included in the radiative transfer and molecular excitation code MADEX (Cernicharo 2012), the JPL (Pickett 1991,1998) and the CDMS (Müller et al. 2001, 2005) catalogues. Our procedure can be summarized as follows: We started with the identification of the lines of the most common species. The rotation temperatures, molecular column densities and source sizes were estimated by fitting the line intensities of the whole family of molecules (all isotopologues) within the program MADEX. In these calculations, we assume Local Thermodynamic Equilibrium, v_{LSR}=−10 km s^{−1}, a linewidth of 8 km s^{−1} and a face-on disk as the source morphology. In the case of a good fit, we create a synthesized spectrum using the derived parameters and subtract it from the observations. Then, we go on with line identification in the residual spectrum. Sometimes, especially for the weak lines, the fit was not good enough. In these cases, we did not subtract the synthesized spectrum in order to avoid spurious features and just went on identifying the features in the original spectrum.

The number of parameters that can be determined for each species depends on the number of lines detected. For example, the source size can only be determined when the lines of the main isotopologue are optically thick. In the optically thick case, T_B ≈ η_ff × J_ν(T_{rot}), where η_ff is the beam filling factor, and J_ν(T_{rot}) = hν/kT_{rot} × (1 − exp(hν/kT_{rot}))^{−1} with T_{rot}, the rotation temperature. Providing that we know T_{rot}, we can estimate the effective size of the emitting region from the line intensities. The emission sizes cannot be constrained if the main isotopologue lines are optically thin.

For the less abundant molecules, the number of detected lines was too low or the line intensities were too uncertain to estimate the rotation temperature. In these cases, a rotation temperature of ∼200 K was assumed and only the molecular column densities are calculated using MADEX. In Sect. 4.1 to 4.19, we give a more detailed description of the fitting for each species and the results of these calculations are shown in Tables 2 and 3.

Frequencies and line identifications are shown in Table A.1. We compare our synthesized spectrum including all species with observations in Figs. A.1-4.

4.1. Methyl cyanide: CH_3CN, CH_3NC

Methyl cyanide (CH_3CN) is one of the best thermometers in hot cores. The symmetric rotor presents a K-ladder structure with transitions that are easily thermalized at the densities prevailing in hot cores. Besides, it is well known that this molecule is especially abundant in this kind of regions. We have detected the whole 12_K →11_K ladder, from K=0 to K=11 in the ν=0 ground vibrational state and in the ν_8=1 vibrational level at E_{vib}=525.17 K (see Table A.4). The high number of detected lines would allow us to determine the rotation and vibrational temperature of this molecule providing that the emission is optically thin (see Fig. 2). As discussed below, this is not the case of the ν=0 lines. Instead, we used the ν_8=1 lines to estimate the rotation temperature. Unfortunately, most of the lines are blended or partially blended. This is the cause of the large uncertainties in the integrated intensities shown in Table A.4. All the lines have T_b>3σ but the uncertainty in the linewidth is large for partially blended lines. As a first step we plotted all the detected lines in a rotational diagram and visually check if any of them were clearly above or below the straight line defined by the other points. We removed the line at 221265 MHz that was clealy above the fit and derived T_{rot}=405^{+100}_{−67} K using the rest of the points (the parameters of this fit are shown in Table 2). The fit was good (R=0.81) suggesting that the contribution of other species to the measured line integrated intensities were within the errors. To corroborate this assumption, as a second step, we removed the lines that were severely blended (difference in frequency less than 4 MHz) and kept only those that were isolated or partially blended. At the end we had only 8 transitions and derived T_{rot}=609^{+357}_{−167} K. The higher rotation temperature was due to the suppression of the lines at 221199, 221394, 221403 and 221422 MHz. The obtained value was still in agreement with our previous fit within the errors. We were worried because the velocity integrated line intensities of the transitions with E_{rot}>400 K (221059, 221210 MHz) present large uncertainties. In order to check the robustness of our temperture estimate, we make a new least square fitting without these lines. This fit provided a lower limit to the rotation temperatue of T_{rot}=250^{+110}_{−59} K. Again the value obtained for the rotation temperature is in agreement with that shown in Table 2 within the errors. Therefore, we decided to keep the estimate shown in Table 2 as a good value for the average rotation temperature although we are aware that, more likely, we have strong temperature gradients accross the hot core with temperatures varying between ∼250 K and ∼600 K.

The results from the CH_3CN ν=0 rotational diagram are shown in Table 2. We obtained a higher rotational temperature in ν=0 than in ν_8=1. One could think that the high temperature in the ground vibrational state was an artifact due to the missing flux in the low K components of the CH_3CN 12_K →11_K ladder. However, comparison of the interferometric PdBI and single-dish 30m observations showed that the spatial filtering is not important and therefore this possibility was discarded. An alternative explanation is that the ground state vibrational lines are optically thick. The opacity can be derived by comparing the CH_3CN and CH_3^{13}CN lines (the lines of the other^{13}C isotopologue^{13}CH_3CN are outside the observed frequency range). Unfortunately the CH_3^{13}CN 12_0→11_0 and 12_1→11_1 lines are blended with those of the main isotopologue. The lowest K transition without any obvious contamination is K=4 (220571 MHz) where we have a feature with T_b∼0.39 K (with an uncertainty of 25% because of partial blending with other lines). Comparing with the main isotopologue, we have I(CH_3CN 12_4→11_4)/I(CH_3^{13}CN 12_4→11_4)∼7, which im-

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Table 1. 30m/PdBI lines^1

Line Freq 30m Flux^2 PdBI Flux^3 PdBI/30m (MHz) (Jy×km s^{−1}) Flux (Jy/beam×km s^{−1}) O^{13}CS 18→17 218199 1.07 (0.40) 0.63 (0.04) ∼60 % H_2CO 3_{0,3}→2_{0,2} 218222 41.11 (1.13) 4.51 (0.19) ∼10% HC_3N 24→23 218325 2.40 (0.38) 1.84 (0.34) ∼100% CH_3OH 4_{2,0}→3_{1,0} 218440 12.54 (0.49) 2.80 (0.03) ∼20% H_2CO 3_{2,2}→2_{2,1} 218476 10.80 (0.42) 3.26 (0.56) ∼30% H_2CO 3_{2,1}→2_{2,0} 218760 10.54 (0.42) 2.98 (0.11) ∼30% OCS 18→17 218903 3.11 (0.44) 3.29 (0.05) ∼100% C^{18}O 2→1 219560 32.85 (0.20) 2.47 (0.10) <10% HNCO 10_{3,8}→_{3,7}^∗ 219657 < 1.13 1.04 (0.11) ∼100% 10_{3,7}→_{3,6}^∗ HNCO 10_{2,9}→9_{2,8}^∗ 219734 1.91 (0.53) 2.13 (0.12) ∼100% 10_{2,8}→9_{2,7}^∗ 219737 HNCO 10_{0,10}→9_{0,9} 219798 3.14 (0.42) 2.12 (0.12) ∼70% H_2^{13}CO 3_{1,2}→2_{1,1} 219909 1.96 (0.37) 1.18 (0.11) ∼60% SO 5_6→4_5 219949 43.20 (2.75) 8.65 (0.21) ∼20% E-CH_3OH 8_0→7_1 220078 3.59 (0.95) 3.95 (0.14) ∼100% 13CO 2→1 220399 144.49 (1.67) 5.54 (0.13) <1% CH_3CN 12_5→11_5 220641 2.18 (0.64) 2.50 (0.13) ∼100% CH_3CN 12_4→11_4 220679 2.00 (0.25) 2.20 (0.08) ∼100% CH_3CN 12_3→11_3 220709 1.68 (0.65) 2.16 (0.70) ∼100% CH_3CN 12_2→11_2 220730 2.07 (0.58) 2.05 (0.46) ∼100% CH_3CN 12_0→11_0^∗ 220747 5.14 (0.71) 4.05 (0.52) ∼100% 12_1→11_1^∗ 220743 ∼100%

1Comparison between the flux measured with the 30m and PdB telescopes for all the lines detected with the 30m single-dish telescope. 2Velocity-integrated flux density in the 30m spectrum. 3Velocity-integrated flux density towards the emission peak. ∗Blended lines.

plies opacities of ∼10 in the main isotopologue line. Since the line opacities are very high, the rotational diagram analysis is not valid and the resulting rotation temperature in the ground state is severely over-estimated. Instead, we derived the CH_3CN column density assuming T_{rot}=405 K (the same as in the ν_8=1 vibrational level) and an opacity of ∼10 for the CH_3CN 12_4→11_4 line and obtained N(E-CH_3CN)=N(A-CH_3CN)=2.6×10^{18} cm^{−2}, i.e., a total (A+E) CH_3CN column density of 5.2×10^{18} cm^{−2}. With these parameters, we fit the high energy rotational lines with a source size of ≈0.07^{′′} (125 AU). The uncertainty in the source size comes from the assumed rotation temperature. By varying the rotation temperature between 250 and 600 K we would obtain sizes of 100−160 AU. Note that these sizes are quite small, similar to typical scales of circumstellar disks.

This compact source model successfully predicted the intensities of the high excitation lines, but the intensities of the low energy transitions were severely underestimated. The only way to fit the whole spectrum was to consider a two-component model: (i) the compact one described above, and (ii) a more extended second component that is filling the beam. We fit the K<4 lines with N(E-CH_3CN)=N(A-CH_3CN)=2.5×10^{14} cm^{−2} and T_{rot}=350 K for this extended component. We tried with a temperature of 250 K obtained from the fitting of the E_{rot}<400 K ν_8=1 lines, but this lower temperature would overestimate the K=0 and K=1 lines. Besides the assumed value is within the uncertaintly of this fit (=250^{+110}_{−59} K).

Our estimate of the total methyl cyanide column density relies on the^{13}C isotopologue line. Of course there is also the possibility that the CH_3^{13}CN 12_4→11_4 line is contaminated by another line and its real intensity is lower. We did not find any good candidate at this frequency. One line of EA-(CH_3)_2CO is very close in frequency but the emission of this line is very weak

(see also Sect. 4.8). Furthermore, the small sizes derived for other species (see following sections) prompted us to consider the two-component model as the most likely one. We would also like to point out that we refer to a beam filling component at the spatial resolution of our observations (∼1900 AU) as “extended component”. This component would not encompass the entire envelope.

We also looked for the deuterated compounds in our spectrum. The most abundant species CH_2DCN and CHD_2CN have no intense lines in the observed frequency range. Only CD_3CN has three intense transitions at 219.965, 219.983 and 219.993 GHz. We have detected the three lines but need a very low rotation temperature, T_{rot}=40 K, to fit them. Because of this surprisingly low rotation temperature, we consider that a misidentification is possible and keep the derived column density as an upper value to the real one. Several weak lines of CH_3NC were identified, a molecule so far only detected towards Sgr B2 (Cernicharo et al. 1988). Unfortunately, most of them are blended or partially blended. Assuming that CH_3NC is coming from the CH_3CN compact core, we calculated a CH_3NC column density of 1.5×10^{16} cm^{−2}, i.e., about 350 times lower than that of CH_3CN. Since we have only one unblended line, we keep this detection as tentative.

4.2. Isocyanic acid: HNCO, HN^{13}CO

The HNCO lines are well fitted with T_{rot}=260^{+4}_{−5} K and N(HNCO)=1.6×10^{15} cm^{−2} (see Fig. 2 and Table 2). In our frequency range, most of the lines of HN^{13}CO are blended with those of the main isotopologue, therefore we cannot estimate the line opacities. Comparing with the 30m spectrum, we calculated that the interferometer is missing about 20% of the flux of the

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Fig. 1. Middle: PdBI spectrum towards the emission peak. Top and bottom: Integrated intensity maps of the most intense lines in the portion of spectrum between 219.5 GHz and 220.7 GHz In all the panels the contours start and increases at steps of 3×σ. Sigma and peak values in Jy/beam×km s^{−1} are: 0.10, 2.47 (C^{18}O 2-1); 0.12, 2.12 (HNCO 10_0-9_0); 0.21, 8.65 (SO 5_6-4_5); 0.22, 7.28 (^{13}CO 2-1); 0.08, 2.20 (CH_3CN 12_4-11_4); 0.11, 1.04 (HNCO 10_3-9_3); 0.12, 2.13 (HNCO 10_2-9_2); 0.11, 1.18 (H_2^{13}CO 3_{1,2}-2_{1,1}); 0.14, 3.95 (E-CH_3OH 8_0-7_1); 0.13, 2.5 (CH_3CN 12_5-11_5). Filled triangles indicate the water masers as observed with the NRAO Very Large Array (Aina Palau, private communication). The masers trace the direction of the youngest outflow (Fuente et al. 2001) that is also clearly seen in the SO and^{13}CO images. The (0,0) position is the phase center of the interferometric observations: 21^h43^m01.^s7, +66^∘03^′23.^{′′}6(J2000).

low energy lines, showing that there is an extended component. For this reason, we adopt the beam filling solution. We looked for the isomer HCNO and the deuterated compound DNCO but unfortunately they do not have intense transitions in the sampled frequency range.

4.3. Methyl formate: A-CH_3OCHO , E-CH_3OCHO

We detected more than sixty lines of A-CH_3OCHO and E- CH_3OCHO in our spectrum, both in the v_t=0,1 vibrational states, the latter at E_{vib}=188.40 K. We tried to fit a rotational diagram to each vibrational state separately in order to measure the rotation and vibrational temperatures independently but this was not possible. The dynamical range of the E_u’s within each vibrational level is very small and the uncertainties in the integrated intensities are too large to obtain a good fit. However we could get a reasonable fit by considering the two vibrational levels together (see Table 2). We measured T_{vib,rot}∼265^{+139}_{−69} K, slightly lower than that of CH_3CN but still in good agreement taking into account the associated uncertainties. We fixed the temperature and varied the source size to fit the lines. The best fit was obtained with a size of ∼0.1^{′′}. Even with this small size, the opacities of the CH_3OCHO ν=0 lines are always ≤1.3 suggesting that our estimate of the rotation temperature is reliable. Unfortunately, the lines of the^{13}C isotopologues are blended with other species and it was not possible to have an estimate of their column densities. We used a weak feature at 128.952 GHz to derive an upper limit to the total column density of^{13}CH_3OCHO of <3.0×10^{17} cm^{−2} in the ∼0.1^{′′} core, which would imply an upper limit to the total (A- +E-) column density of <2.0×10^{19} cm^{−2} assuming^{12}C/^{13}C=65. This allow us to say that the methyl formate column density is accurate within a factor of 4. About deuteration, we have three detected lines at 219242 MHz, 218730 MHz and 219132 MHz that would correspond to CH_3OCDO and CH_2DOCHO. The first two lines are blended with lines of EE- (CH_3)_2CO which makes the derived deuterium fraction more uncertain. Taking into account the contribution of acetone, we fitted the intensities of the three lines assuming a deuterium fraction of ∼0.06.

4.4. Ethyl cyanide: CH_3CH_2CN

The detection of eight lines of CH_3CH_2CN strongly confirms the identification of this species. Although three of them are

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Fig. 2. Results of the rotational diagrams for CH_3CN ν=0, CH_3CN ν_8=1, CH_3OCHO , HNCO, CH_2DOH and aGg’-(CH_2OH)_2. The high rotation temperature fitted to the CH_3CN ν=0 rotational diagram is the consequence of the lines being optically thick and is not considered in our modeling (see Sect. 4.1). In the rotational diagram of the CH_3CN ν_8=1 vibrational state we use different symbols for: blended lines (empty circles), isolated or partially blended lines (filled circles) and the points with E_{rot}>400 K (triangles). The three straight lines correspond to the least square fittings with: all the points (black), only unblended lines (red), unblended lines with E_{rot}<400 K (blue). For CH_3OCHO, the points corresponding to the ν=0 lines are indicated with filled squares and those of ν_t=1 with empty circles. The parameters of the transitions used in the rotation diagrams are listed in Tables A.3-8. Red points have not been used in the least square fitting because they correspond to heavily blended lines.

heavily blended, the other five lines are enough to identify this species. The lines belong to the ground state and to the lowest energy vibrational states at E_{vib}=297.12 K (Daly et al. 2013). We tried to fit the rotational diagram but unfortunately the points did not follow a clear pattern and we could not determine the rotation temperature. Hence, we fixed the rotation temperature to a value of 200 K (a reasonable value from the rotational temperatures measured with the other species, see Table 2) and fitted the column density. A beam averaged column density value of 5.2×10^{14} cm^{−2} was derived from the intensity of the most intense lines. The fit improved assuming that the emission comes from a compact source with a diameter of ∼0.1^{′′}, because some lines become optically thick. This is the solution we finally adopted (see Table 3). We searched for the lines of the^{13}C isotopologues and the deuterated species but the lines were too weak to obtain a significant upper limit to their column densities.

4.5. Methanol: A- and E-CH_3OH, A- and E-^{13}CH_3OH,

CH_2DOH

Only five lines of methanol (including the A- and E- species and their vibrational states) were detected and their intensities were not consistent with LTE. This is not unexpected since the emission of the low energy lines is optically thick and extended (see Table 1). We searched for the lines of^{13}CH_3OH and the deuterated species CH_2DOH. Ten lines of CH_2DOH were detected. We removed from our fit the lines that could be blended with other more intense lines and we still kept 4 “clean” lines that allowed us to derive the results shown in Fig. 2 and Table 2. The rotation temperature of CH_2DOH, ∼157^{+15}_{−13} K, is lower than that of CH_3CN suggesting that it arises from a different region within the hot core. Based on the different spatial distribution of the high excitation and low excitation lines of methanol, FU05 proposed the existence of two components: a hot component towards the hot core and a colder component that extends along the outflow direction. Although the two components are expected to contribute to the total CH_2DOH emission, its low rotation temperature suggests that it is dominated by the extended one.

For^{13}CH_3OH, we detected two lines of the ν_t=0 vibrational state (220323 and 221282 MHz) and one (221424 MHz) of the ν_t=1 state. Although the emissions of the low energy lines of the main isotopologue are extended (see Table 1), we considered that the emissions of the 13-methanol lines come mainly from the compact source. The line at 220323 MHz is heavily blended and cannot be used to estimate the 13-methanol column density. Using the other two lines we fitted a vibrational/rotation temperature of ∼238 K and a total^{13}CH_3OH ν_t = 0, 1 column density of 5.3×10^{18} cm^{−2}. In order to estimate the uncertainty in our estimate of the 13-methanol column density, we repeated the fit by fixing the rotation temperature to 200 K and 400 K. The derived column densities are 3.0×10^{18} cm^{−2} and 6.1×10^{18} cm^{−2}, respectively, which suggests that our estimate of the^{13}C-methanol column density is accurate within a factor of 2.

Since the CH_3OH lines are optically thick, we derived the methanol column density from^{13}CH_3OH assuming that all the

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Table 3. NGC 7129 FIRS 2 hot core model

Species T_{rot}(K) N_X (cm^{−2})^1 D(^{′′})^2 CH_3CN ν=0 405 5.2×10^{18} 0.07 E^4 350 5.0×10^{14} BF^3 G^5 CH_3CN ν_8=1 405 7.0×10^{16} 0.07 G CH_3^{13}CN ν=0 405 8.0×10^{16} 0.07 E 350 7.7×10^{12} BF G CH_3NC^∗ 405 3.0×10^{16} 0.07 G CD_3CN^∗ 40 <5.0×10^{13} BF G CH_3OH ν_t=0,1 238 3.4×10^{20} 0.12 G 157^6 2.0×10^{166} BF G 13CH_3OH ν=0 238 4.2×10^{18} 0.12 G 13CH_3OH ν_t=1 238 1.1×10^{18} 0.12 G CH_2DOH 157 1.4×10^{16} BF G CH_3OCHO ν=0 265 3.4×10^{18} 0.12 E CH_3OCHO ν_t=1 265 1.7×10^{18} 0.12 E CH_3OCDO 265 1.6×10^{17} 0.12 G S-CH_2DOCHO 265 8.0×10^{16} 0.12 G A-CH_2DOCHO 265 8.0×10^{16} 0.12 G CH_3CH_2CN 200 9.4×10^{16} 0.12 E CH_3CH_2CN ν_{13}=1 /ν_{21}=1 200 2.9×10^{16} 0.12 E CH_2CHCN ν_{11}=0,1 200 <9.4×10^{17} 0.12, G CH_3CH_2OH 200 3.0×10^{18} 0.12 E CH_3COCH_3 200 1.0×10^{15} BF G (o+p)-H_2CO 200 7.0×10^{17} 0.34 E (o+p)-H_2^{13}CO 200 1.1×10^{16} 0.34 E (o+p)-D_2CO 200 5.9×10^{15} 0.34 E OCS 200 2.0×10^{18} 0.32 E OCS ν_2=1 200 2.4×10^{16} 0.32 E O^{13}CS 200 3.1×10^{16} 0.32 E HC_3N 200 2.0×10^{16} 0.20 E HC_3N ν_7=1 200 2.0×10^{15} 0.20 E DC_3N^∗ 200 3.1×10^{14} 0.20 G SO 200 >>2.4×10^{15} BF E S^{18}O 200 <8.0×10^{15} 0.6 G SO_2 200 6.0×10^{15} BF G 34SO_2 200 2.7×10^{14} BF G HNCO 260 1.6×10^{15} BF E HN^{13}CO 260 2.5×10^{13} BF E (o+p)-H_2^{13}CS 200 1.2×10^{15} 0.60 E (o+p)-HDCS^∗ 200 1.0×10^{15} 0.60 E HCOOH 100 9.5×10^{18} 0.12 E H^{13}COOH 100 1.5×10^{17} 0.12 E HCOOD^∗ 100 1.0×10^{17} 0.12 E CH_3OCH_3 200 4.0×10^{18} 0.12 E CH_3CHO ν_t=0 100 4.0×10^{15} BF G CH_3CHO ν_t=1 100 5.6×10^{14} BF G CH_3CHO ν_t=2 100 1.1×10^{14} BF G aGg’-(CH_2OH)_2 145 2.0×10^{15} BF G (o+p)-H_2CCO^∗ 200 6.7×10^{14} BF G CH_2OHCHO 265 1.0×10^{15} BF G NH_2CHO^∗ 200 3.0×10^{14} BF G 1Estimated column densities.^2Diameter of the emission region for the compact component assuming a disk morphology.^3BF: Beam filling component.^4 E: The disk diameter estimated from our modeling.^5 G: only a guess because the size of the disk cannot be constrained on basis of our data.^6The fit to this component is not reliable because the lines suffers from spatial filtering and opacity effects (see text).^∗Tentative detection

13CH_3OH emission comes from the compact component and 12C/^{13}C=65. Then we added an extended component to fit the rest of lines. The value obtained for the CH_3OH column density in the extended component is not reliable because the intensities of the main isotopologue lines are affected by spatial filtering and opacity effects. Moreover, the separation of the methanol emission in these two components is model-dependent since we fixed the size of the compact core in our calculations. The beam average CH_3OH column density derived from^{13}CH_3OH is, however, reliable as long as the^{13}C-isotopolgue is optically thin regardless of the detailed spatial distribution of methanol within the observational beam. For this reason, we used this value to calculate the deuterium fraction, [CH_2DOH]/[CH_3OH]=0.02. This is an average value within the hot core.

4.6. Trans- and Gauche- ethanol: T- and G-CH_3CH_2OH

We detected six ethanol lines which includes four from T- CH_3CH_2OH and two from the G conformer that is at 60 K above the T-state. However, only three lines are clearly detected (at 218554, 218655, and 220155 MHz) since the other are significantly blended with transitions from other species or U-lines. Because of this, we could not apply the rotational diagram technique. Instead, we assumed a rotation temperature of T_{rot}=200 K, and derived the column densities using the most intense lines. We assumed a size of ∼0.1^{′′} to better fit the data published by FU05 (see Sect.5). The results are shown in Table 3.

4.7. Acetone: AA-(CH_3)_2CO, AE-(CH_3)_2CO, EA-(CH_3)_2CO, EE-(CH_3)_2CO

Several lines of acetone were detected in our spectrum (218773, 219076, 219220, 219242, 219264, 220355, 220466, 220764, 220962 MHz) being the most intense at 219220, 219242 and 219264 MHz. Because many of them are blended, it is not possible to determine an accurate rotation temperature. We assumed T_{rot}=200 K and obtained a total (AA+EA+AE+EE) beam average column density of 1.0×10^{15} cm^{−2}.

4.8. Formaldehyde: H_2CO

Three lines of p-H_2CO and one of o-H_2^{13}CO were detected in the PdBI spectrum. The lines of the main isotopologue are optically thick and most of their emission has been filtered by the interferometer (see Table 1). Because of the large fraction (85%) of missing flux in the main isotopologue line, we are surely missing an extended component. According with Fig. 1, the emission of the o-H_2^{13}CO is unresolved by our observations. Besides, FU05 derived a size of 0.58±0.24^{′′}× 0.40±0.24^{′′}for the D_2CO emission. Based on these results, we were able to fit all the lines of this work and FU05 with an (ortho+para)-H_2^{13}CO column density of 1.1×10^{16} cm^{−2} and (ortho+para)- D_2CO column density of 5.9×10^{15} cm^{−2}, and a source with a diameter of 0.34^{′′} ( ∼426 AU ). We assume T_{rot}=200K and an ortho-to-para ratio of 3.

There are no H_2C^{18}O and HDCO lines in the frequency range of our observations that we could use to further constrain our model.

4.9. Carbonyl sulfide: OCS, O^{13}CS

The J= 19→18 rotational lines of the ground vibrational states of OCS and O^{13}CS lie in the range of wavelengths covered by our observations. We measured T_b[OCS 19→18]/T_b[O^{13}CS 19→18]∼5. Comparing the 30m and PdB spectra, we discarded the possibility that this low intensity ratio is a consequence of the spatial filtering. The opacity of the OCS 19→18 line must be very high, τ∼12 . Assuming T_{rot}=200 K, we derived a OCS column density of ∼2×10^{18} cm^{−2} and a source size of ≈0.32^{′′} (400 AU), four times that derived for the compact component

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

of CH_3CN. In our spectrum, we also detected two lines of the OCS ν_2=1 vibrational state at E_{vib}=748.8 K (see Table A.1). Assuming the same source size, the intensities of these lines imply a vibrational temperature, T_{vib}=170 K, in agreement with the rotational temperature we assumed. The same assumptions are used to fit the OC^{33}S J=19→18 line in FU05.

4.10. Sulfur monoxide: SO, S^{18}O

Only the intense line of SO at 219949 MHz was detected. From its intensity and assuming T_{rot}=200 K, we derived a beam averaged SO column density of 2.4×10^{15} cm^{−2}. The emission of this line is extended (see Table 1 and Fig. 1) and, most likely, optically thick. There are no lines of^{34}SO,^{33}SO and/or S^{18}O in the spectrum that could be used to determine the line opacity. As commented in Sect. 5 a possible detection of S^{18}O in the spectrum published by FU05 suggests that the column density could be as much as a factor of ∼600 higher (see Sect.5 and Table 3). Unfortunately this line is blended with other intense lines which makes the estimate uncertain. We consider our fitted value as a lower limit to the real one.

4.11. Sulfur dioxide: SO_2,^{34}SO_2

One SO_2 line at 219276 MHz and two^{34}SO_2 lines at 219355 and 221115 MHz, respectively were detected. These lines are reasonably fitted using T_{rot}=200 K, a beam averaged SO_2 column density of 6×10^{15} cm^{−2} and^{32}S/^{34}S=22. The SO_2 line is optically thin providing a good estimate of the total number of SO_2 molecules within our beam. On the other hand, we could not estimate an accurate value of the opacity that would allow us to constrain the size of the emitting region. We checked that the SO_2 line would be optically thin even if all the emission arises from the 0.1^{′′} compact core, however.

4.12. Cyanoacetylene: HCCCN,HCCCN ν_7=1, DCCCN, HCCNC

We detected one HC_3N line at 218325 MHz and two lines of the vibrational state ν_7=1 at 218861 MHz and 219174 MHz, respectively, although the one at 219174 MHz is blended with an intense ethanol line. In addition, we tentatively detected the H^{13}CCCN 25→24 line. Unfortunately the frequency of the H^{13}CCCN line is close to that of the^{13}CO 2→1 line and could have some contribution from its wing. Assuming that the isotopologue line is not blended with^{13}CO, we fit this line with T_{rot}=200 K and N(H^{13}CCCN)=8.8×10^{14} cm^{−2} and a source size of ∼0.20^{′′} which implies an upper limit to the HC_3N column density of <5.7×10^{16} cm^{−2}. This value, however, overestimates the intensity of the lines of the main isotopologue, that are better fitted with N(HCCCN)=2.0×10^{16} cm^{−2}. We adopt the latter solution and conclude that our column density is accurate within a factor of 3. There is a weak feature at 219490 MHz that could correspond to DCCCN J=26→25. Since this line is very weak and there is no other DCCCN line in the spectrum that could confirm the detection, we will consider it as a tentative detection and use its intensity to derive an upper limit to the DCCCN column density of N(DCCCN)/N(HCCCN)<0.016. We could have detected one line of HCCNC at 218558 MHz but it is blended with an intense ethanol line. Therefore we can only derive a lower limit to the N(HCCCN)/N(HCCNC) column density ratio of >13.

4.13. Acetaldehyde: CH_3CHO

Very few intense lines of CH_3CHO are found in the observed wavelength range and some of them are blended with others from abundant species. We detected without blending: the 220446 MHz line of E-CH_3CHO, and marginally the 221222 MHz line of A-CH_3CHO ν_t=1, the 219780 MHz line of A-CH_3CHO ν_t=2, and 221216 MHz line of E-CH_3CHO ν_t=2. All these lines were fitted assuming T_{vib}=100 K. Making the additional assumption that T_{rot}=T_{vib}, we derived a total beam averaged A+E CH_3CHO column density of 4×10^{15} cm^{−2} in the ν=0 ground state. In this case, the lines of the^{13}C isotopologue were not detected. Like for other oxygenated molecules, we assumed that the source is extended relative to our beam. Although the firm detections in the 218-221 GHz frequency range are only a few, this model is fully confirmed by the good match to the data published by FU05 (see Sect. 5).

4.14. Formic acid: HCOOH

Two lines of HCOOH, one at 218938 MHz and the other at 220038 MHz were detected in our spectrum. However their line intensities were not consistent with thermalized optically thin emission. Since the two lines have very similar E_u, this discrepancy cannot be due to a wrong rotation temperature. Spatial filtering cannot be the cause of this discrepancy, because such an intense line should have been detected in the 30m spectrum. However the Einstein spontaneous emission coefficient, A_{i j}, of the 220038 MHz line is 10 times lower than that of the 218938 MHz line which results in a higher opacity of the former for the same physical conditions. We propose that the high opacity of the line at 220038 MHz causes the anomalous line intensity ratio. The detection of H^{13}COOH at 219341.849 MHz also argues in favor of a high column density of HCOOH in this source. We can reasonable fit both lines of HCOOH and that of H^{13}COOH assuming T_{rot}=100 K, a total HCOOH column density of 9.5×10^{18} cm^{−2} and a source size of ∼0.1^{′′}. The profile of the H^{13}COOH line is wider than expected (see Fig. A.2), suggesting some contribution from the outflow or partial blending with other line. Because of this possible blending, the integrated intensity of this line is uncertain by a factor of 2. We selected the solution that best fitted the 218938 MHz line. The fit to the HCOOH line at 220038 MHz is not perfect but this is not worrying because our model is not adequate to reproduce the profile of very optically thick lines. In fact the intensity of this line is not sensitive to the HCOOH column density in the range of column densities we are dealing with. Some HCOOH lines were also observed by FU05. As seen in Fig. 5, the lines are reasonably reproduced with our values. We have searched for the DCOOH and HCOOD lines in our spectrum and found one transition of HCOOD at 218541 MHz from which we derive N(HCOOD)/N(HCOOH)≈0.01 as long as both species are coming from the same region. Since we have only one line of HCOOD and it is at 4σ, we indicated this detection as tentative in Table 3.

4.15. Dimethyl ether: CH_3OCH_3

We detected four unblended lines of CH_3OCH_3, at 218492, 219301, 220847, and 220893 MHz. The other lines of this species are blended with intense lines. Assuming that the source is filling the beam, we derived T_{rot}=500 K and N(CH_3OCH_3)=2×10^{16} cm^{−2}. We considered that this apparently high rotation temperature was an opacity effect and obtained a

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

better fit assuming T_{rot}=200 K, N(CH_3OCH_3)=4×10^{18} cm^{−2} and a source diameter of 0.1^{′′}. These parameters are consistent with the non-detection of the^{13}C isotopologues and we adopted them.

4.16. Ethylene glycol: aGg’-(CH_2OH)_2, gGg’-(CH_2OH)_2

The aGg’ conformer of ethylene glycol, together with methyl formate, is one of those with the highest number of lines in our spectrum. We detected twelve lines, and seven were unblended. We used these seven unblended lines to derive a rotation temperature of 145 K and a beam averaged column density of N(aGg’- (CH_2OH)_2)=2.3×10^{15} cm^{−2} (see Fig. 2 and Table 2). One of the lines, that at 218576 MHz was removed from the final fit since it was very far from the intensity traced by the other lines (see Fig. 2) and is certainly blended with something else. In this case, we did not have information about the transitions of the^{13}Cisotopologues and deuterated species. The emission is compatible with the beam filling assumption although we cannot discard a smaller size.

We also searched for gGg’-(CH_2OH)_2 in our spectrum. We have a good match with 8 lines that can be assigned to this species (218712, 219097, 219389, 219410, 220763, 220448, 220887, 221596 MHz). Modeling the spectrum, we obtain that 5 additional lines are also present in our data but blended with other species. However there are 2 lines, at 218144 MHz and 220249 MHz, that should have been detected and do not appear in the spectrum. These lines have similar energies as the previous ones and their absence cannot be explained with a simple excitation argument. This species has not been detected in any other source thus far. Waiting for confirmation, we do not include it in the model.

4.17. Ketene: H_2CCO

We detected one o-H_2CCO line at 220177 MHz and one p- H_2CCO at 221545 MHz with similar intensity. The first transition is at E_u= 62.4 K and the second one E_u= 894.8 K. It is not possible to fit both lines assuming reasonable physical conditions and optically thin emission. One possibility is that the line at 221545 MHz is not ketene. In this case, we can fit the other line assuming a rotation temperature of T_{rot}=200 K and a beam averaged ortho+para H_2CCO column density of 6.7×10^{14} cm^{−2}, where we have assumed an ortho-to-para ratio of 3. Another possibility is that the emission is optically thick in both lines. In this case, we need a ketene column density of 4.0×10^{18} cm^{−2} in a compact ∼0.1^{′′}region. There is no line of the^{13}C isotopologue in the observed frequency range that would allow us to determine the opacities. The deuterated compounds have no intense transitions in the observed wavelength range either. We selected the optically thin case adopting a conservative approach. Taking into account the uncertainty in its column density, we do not use this species in our comparion with other sources.

4.18. Glycolaldehyde: CH_2OHCHO, Formamide: NH_2CHO

There are thirteen intense lines of glycolaldehyde in the sampled wavelength range. From these, six are not blended with other features and do not have any other likely identification. Assuming T_{rot}=200 K, we estimated a beam averaged column density of 1.0×10^{15} cm^{−2}. Only one line of NH_2CHO lies in our spectrum. It is at 218459 MHz and is blended with a line of T-ethanol. Our fit to T-ethanol failed to predict the high intensity of the observed feature suggesting some contribution from

NH_2CHO. The total intensity would be consistent with a beam averaged formamide column density of 3.0×10^{14} cm^{−2}.

4.19. Vinyl cyanide: CH_2CHCN

We detected two rotational lines, at 218675 MHz and 220345 MHz, that could correspond to CH_2CHCN. The intense line at 220345 MHz is overlapped with one of CH_3CN. Some features of the ν_{11}=1 vibrational state at an energy of 328.4 K could have also been detected but are blended with other more intense lines. Since we could not determine the rotation temperature, we assumed the fixed value of T_{rot}=200 K and the same source size as the chemically related species CH_3CN, i.e., a diameter of ∼0.1^{′′}. But our fit was very bad. The intensities of the lines at 220345 MHz and 218675 MHz cannot be accounted by LTE models. We were not able to obtain a better fit by varying the rotation temperature and/or the source size. One possibility is that the intensity of one of the lines is wrong because of baseline uncertainties or spatial filtering. The second possibility is that our identification is false. Since we do not have a better candidate for the 220345 MHz line, we derived an upper limit to the vinyl cyanide column density using its line intensity and fixing the rotation temperature to 200 K. This compound is quite abundant in massive hot cores (see (López et al. 2014), and this upper limit is interesting for comparison with this kind of objects.

5. The hot core model

Based on the calculations explained in Sect. 4, we propose the hot core model shown in Table 3. This model is not unique and some parameters, especially source sizes, are quite uncertain. However it cannot be done better. Higher spatial resolution are required to better constrained the spatial structure. Fortunately, the total number of molecules in our beam is well constrained, especially when we have detected the^{13}C isotopologue or the emision is optically thin, which is the case for most species. Our model is self-consistent, i.e., once a molecule is included, its isotopologues and deuterated compounds are also included. For isotopologues, we assume^{12}C/^{13}C=65,^{16}O/^{18}O=650,^{32}S/^{34}S=22 and^{34}S/^{33}S=6 (Chin et al. 1995, Milam et al. 2005). The column densities of the deuterated species are calculated independently to determine the deuterium fractions. When possible we directly compare the deuterated compound with the^{13}C isotopologue, that is expected to have similar fractional abundance, in order to avoid opacity effects in the derived column density ratio. The obtained values of deuterium fractions are: ∼0.06 for methyl formate, ∼0.02 for methanol, ∼0.008 for the doubly deuterated formaldehyde, ∼0.01 for DC_3N, and <0.01 for HCOOD (see Table 3). Of course these are average values in the hot core since the hydrogenated and deuterated species could have different spatial distributions. Using MADEX, we have synthesized the total spectrum assuming LTE, the parameters shown in Table 3 and convolving with a circular beam of ∼1.4^{′′}.The obtained spectrum is compared with observations in Figs. A.1- 4. Our fit is reasonably good taking into account the simplicity of our model. There are, however, two frequency ranges 218.0- 219.12 GHz and 221.46-221.62 where the agreement is poor. One reason is possible observational errors. Note that the second region is at the end of the observed frequency range where the passband calibration is more uncertain. But the existence of intense ”U” lines suggests the existence of a population of COMs that have not been identified yet.

An important test for our model is to reproduce the interferometric observations published by FU05 with a higher an-

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Table 4. Comparison of rotation temperatures between hot cores and hot corinos

Hot core/corino L_⊙ T_{rot} (CH_3CN) T_{rot} (X) ref.

IRAS 16293-2422 6.9−23 ∼150-390 K ∼60 K ( CH_3CHO) Cazaux et al. (2003), Bisschop et al. (2008) Pineda et al. (2012) IC 1396 N <300 ∼100 K Neri et al. (2007), Fuente et al. (2009) IRAS 22198+6336 370 ∼100 K ∼120 K (CH_3CH_2OH) Sánchez-Monge et al. (2010), Palau et al. (2011) NGC 7129 FIRS 2 480 ∼400 K ∼120 K (aGg’-(CH_2OH)_2) This work AFGL 5142 2300 ∼140−210 K (CH_3CH_2OH) Palau et al. (2011) Orion KL ∼10^4 400−600 K ∼100-200 K (CH_3OCH_3,OCS) Tercero et al. (2010), Beuther et al. (2011), Brouillet et al. (2013), Bell et al. (2013)

gular resolution of 0.63^{′′}×0.46^{′′}. We synthesized the spectrum assuming the same parameters as in Table 3 but convolving with a smaller beam, ∼0.52^{′′}, and compared with FU05 observations (see Fig. A.5). We find a remarkably good agreement for most of the species which confirmed that our model was not far from reality.

We identified the line at 231143 MHz in FU05 as H_2^{13}CS providing an estimate of the H_2CS abundance in the hot core (see Table 3). However we have only one line of the^{13}C isotopologue and the identification could be wrong. A similar situation occurs for S^{18}O. We have detected one line at 228272 MHz but it is blended with intense CH_3OCHO and CH_3OCOD features. From this line we estimate a S^{18}O column density of 8×10^{15} cm^{−2} within the ∼0.52^{′′} (∼650 AU) beam. Because of the blending, this estimate is model-dependent and suffers from larger uncertainty.

An important discrepancy between our model and FU05 observations comes from G+ethanol. There are two predicted G+ethanol lines, 228491 MHz and 228560 MHz that do not appear in the FU05 spectrum while all the T−ethanol lines are correctly reproduced. One possibility is that we have a lower kinetic temperature than assumed since the G+ethanol is 60 K higher in energy than T−ethanol. But the temperature would have to be unreasonably low, <50 K, to reproduce the observations.These lines are close to the edge of the spectral band and could suffer from some instrumental effects.

In Table A.2 we give a list with our new identifications of the data published by FU05. In this work we have identified more lines and found some misidentifications. The lines previously identified as c-C_3D are instead carried by CH_3CHO. In fact, CH_3CHO is the carrier of most of the lines in the band centered at 231.3 GHz. We have a handful of lines around the^{13}CS frequency without any plausible identification. One possibility is that we are observing high velocity gas emitting in the^{13}CS 5→4 line, but this would imply an outflow with velocities as high as 50 km s^{−1}. We have not seen such high velocities in the CO single-dish and interferometric spectra (Fuente et al. 2001, FU05). Therefore, we think that there are still some unidentified lines at these frequencies. The intense lines at 228307 MHz, 228363 MHz, 228427 MHz and 228467 MHz, although identified, are poorly reproduced by our model. We have not found any simple way to improve the agreement between our model and observations. Either these lines are far from the LTE approximation or we are still missing important species. Additional observations could help to discern their origin.

The observations presented in this paper have significantly contributed to the understanding of the spectra published by FU05 proving that observations in a large range of frequencies are needed for the correct line identification.

Table 5. Average fractional abundances^1

T_{dust} =50 K T_{dust} =400 K M_{gas+dust} (M_⊙) 1.8 0.46 N_{H2} (cm^{−2}) 2.0×10^{24} 5.0×10^{23} CH_3CN (^{13}C)^2 6×10^{−9} 3×10^{−8} CH_3OCHO 2×10^{−8} 7×10^{−8} CH_3CH_2CN 4×10^{−10} 2×10^{−9} CH_2CHCN <3×10^{−9} <2×10^{−8} CH_3OH (^{13}C) 1×10^{−6} 5×10^{−6} CH_2DOH 7×10^{−9} 3×10^{−8} CH_3CH_2OH 1×10^{−8} 4×10^{−8} CH_3COCH_3 5×10^{−10} 2×10^{−9} H_2CO (^{13}C) 2×10^{−8} 8×10^{−8} D_2CO 2×10^{−10} 7×10^{−10} OCS (^{13}C) 5×10^{−8} 2×10^{−7} HC_3N 2×10^{−10} 8×10^{−10} SO_2 3×10^{−9} 1×10^{−8} HNCO 8×10^{−10} 3×10^{−9} H_2CS (^{13}C) 7×10^{−9} 3×10^{−8} HCOOH (^{13}C) 3×10^{−8} 1×10^{−7} CH_3OCH_3 1×10^{−8} 6×10^{−8} CH_3CHO 2×10^{−9} 1×10^{−8} aGg’-(CH_2OH)_2 1×10^{−9} 4×10^{−9} CH_2OHCHO 5×10^{−10} 2×10^{−9}

1 Average fractional abundance in a disk with a diameter of ∼1.4^{′′}. 2 Derived from the^{13}C isotopologue assuming^{12}C/^{13}C=65.

6. Discussion

6.1. Physical conditions

It is known that hot cores are heterogenous objects where different species are coming from different regions with different physical conditions (see. e.g. Beuther et al. 2011, Brouillet et al. 2013, Bell et al. 2013). For this reason, we only compare rotation temperatures measured with the same molecular species.

Methyl cyanide is easily thermalized for the densities prevailing in hot cores and hence a good thermometer of the molecular gas. The rotational diagram shows that the temperature in the FIRS 2 hot core is ≈400 K. This temperature is similar to that measured in massive hot cores. Beuther et al. (2011) proposed the existence of a warm component of 600±200 K in the Orion hot core based on submillimeter CH_3CN lines as observed with the Submillimeter Array (SMA). More recently, Bell et al. (2013) estimated a rotation temperature of ∼220 K towards IRc2 and ∼400 K in the hot spot located ∼14^{′′} NE using data from the 30m telescope. Lower temperatures, however, are found in hot corinos. Bisschop et al. (2008) derived an upper limit of <390 K in IRAS 16293-2422 A and B based on interferometric SMA data. Fuente et al. (2009) derived a rotation temperature of 97±25 K in the hot core located in the IM protocluster IC 1396 N. A similar rotation temperature, ∼100 K, was de-

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Fig. 3. Comparison of the molecular abundances in FIRS 2 and the Orion hot core (see Table 6). All the molecular abundances have been normalized to that of CH_3OH. Black horizontal lines indicate the loci of the FIRS 2 values that differ by less than a factor of 5 from those of Orion. Red lines indicate the same but for a factor of 10. Empty circles indicate doubtful values.

Table 6. Comparison between FIRS 2 and Orion KL

FIRS 2^1 Orion KL^2 Refs^3 N (cm^{−2}) N (cm^{−2}) CH_3CN 1.3×10^{16} (^{13}C)^4 1.2×10^{16} (^{13}C) Bell et al. (2014) CH_3OCHO 3.7×10^{16} 2.9×10^{17} (^{13}C) Carvajal et al. (2009), Haykal et al. (2014) CH_3OCDO 1.1×10^{15} 1.0×10^{15} Margulès et al. (2010) CH_3CH_2CN 8.8×10^{14} 2.3×10^{16} (^{13}C) Daly et al. (2013) CH_2CHCN <6.9×10^{15} 2.4×10^{15} López et al.(2014) CH_3OH 2.5×10^{18} (^{13}C) 1.1×18^{18} (^{13}C) Kolesniková et al. (2014) CH_2DOH 1.4×10^{16} 1.5×10^{15} Neill et al., (2013) CH_3CH_2OH 2.2×10^{16} 3.6×10^{16} Kolesniková et al. (2014) H_2CO 4.1×10^{16} (^{13}C) 4.3×10^{16} (^{13}C) Neill et al. (2013) D_2CO 3.4×10^{14} 4.2×10^{13} Turner, B.E. (1990) OCS 1.0×10^{17} (^{13}C) 4.2×10^{16} (^{13}C) Tercero et al. (2010) HC_3N 4.1×10^{14} 7.7×10^{15} (^{13}C) Esplugues et al. (2013b) S^{18}O <1.5×10^{15} 2.2×10^{14} Esplugues et al. (2013a) SO_2 6.0×10^{15} 1.1×10^{17} Esplugues et al. (2013a) HNCO 1.6×10^{15} 5.5×10^{15} (^{13}C) Marcelino et al. (2009) H_2CS 1.4×10^{16} (^{13}C) 3.3×10^{15} (^{13}C) Tercero et al. (2010) HDCS 1.8×10^{14} 9.5×10^{13} Tercero et al. (2010) HCOOH 6.9×10^{16} (^{13}C) 4.9×10^{13} Turner, B.E. (1991) CH_3OCH_3 2.9×10^{16} 9.0×10^{15} Comito et al. (2005) CH_3CHO 5.0×10^{15} 2.8×10^{14} Turner, B. E. (1991) NH_2CHO^∗ 3.0×10^{14} 9.6×10^{14} Motiyenko et al. (2012) 1 Average molecular column densities in a disk with a diameter of 1.4^{′′} . It is calculated with the expression N = N_c × (D(^{′′})/1.4^{′′})^2 + N_{ex} where N_c and D are the column density and size (diameter) of the compact component, respectively, and N_{ex}, the column density of the beam filling component as shown in Table 3.

2 Average molecular column densities considering a region of 15^{′′} of diameter towards Orion KL. We assume a beam filling factor of 0.44 for the hot core component (size=10^{′′}).

3 References for the Orion column densities.

4 Derived from the^{13}C isotopologues assuming^{12}C/^{13}C=65 for FIRS 2 and^{12}C/^{13}C=50 for Orion.

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

rived by Sánchez-Monge et al. (2010) in the hot core associated with IRAS 22198+6336. Although the luminosity of FIRS 2 is similar, our observations suggest the existence of a warmer gas component (∼400 K) in FIRS 2 than in IC 1396 N and IRAS 22198+6336. IC 1396 N is a protocluster with three young stellar objects (YSOs). Although the total luminosity is similar to that of FIRS 2, the luminosity of each YSO is lower and probably closer to that of an Ae star, i.e., <100 L_⊙. IRAS 22198+6336 is morphologically similar to FIRS 2. Sánchez-Monge et al. (2010) detected only the K-lines with E_u=100−300 K, while we used lines with E_u>600 K in this study. It is possible that a warmer component remains hindered in IRAS 22198+6336 and would require higher sensitivity observations of transitions with higher E_u to be detected. In fact, FU05 determined a gas temperature of 50−100 K in FIRS 2 from lower sensitivity observations of the CH_3CN 5_K →4_K ladder, from lines with E_u=13−154 K.

The rotational diagrams of the oxygenated species give lower rotation temperatures than with CH_3CN. We derived rotation temperatures between 100 K and 200 K from the CH_2DOH, CH_3CHO and aGg’-(CH_3OH)_2 lines and between 200 K and 300 K from CH_3OCHO and HNCO. Palau et al. (2011) derived rotation temperatures of ∼100−150 K in the IM hot cores in IRAS 22198+6336 and AFGL 5142 from the ethanol lines. Rotation temperatures of around 100 K are also derived in Orion from CH_3OCH_3, methyl formate, deuterated methanol and OCS (Tercero et al. 2010, Peng et al. 2012, Brouillet et al. 2013). Therefore, we do not detect significant differences between the rotation temperatures measured with these O-bearing species between IM and massive hot cores. Lower rotation temperatures, ∼50 K, are measured with CH_3OCHO in IRAS 16293-2422 (Pineda et al. 2012).

In Table 4, we show a summary of the rotation temperatures derived from different molecules and for different hot cores. The comparison is not totally fair since CH_3CN and the O-bearing molecules could come from different regions. This is the case of IRAS 16293-2422, where CH_3CN is coming mainly from the southern component (A) and the O-bearing molecules from the northern one (B) (Bisschop et al. 2008). As commented above, different regions are associated with O- and N-bearing molecules in Orion. Towards the other hot cores, the spatial resolution provided by the existing observations is lower, preventing us from resolving regions with different chemistries. Nevertheless, it seems that there is a weak trend with the maximum gas temperature increasing from low to massive hot cores as measured with CH_3CN. There is no trend for the O-bearing molecules.

This suggests a scenario in which the O-bearing molecules are more abundant in extended regions with temperatures ∼100 K in both hot cores and corinos. Instead, CH_3CN probes the hottest region of the core, and its rotation temperature increases with the luminosity. Of course, there is a problem with the spatial scales that are different for low-mass and massive stars. But, taking into account that massive stars are more distant, this would favor the interpretation of higher temperatures in the latter. Therefore, within the limitations of our analysis, we can conclude that there is a trend of increasing temperature from hot corinos to massive hot cores. It is not so clear between IM and massive stars. As we discuss, there is no obvious difference between FIRS 2 and Orion.

Another important parameter is the total amount of gas in the hot core. One possibility is to calculate it from the dust continuum emission assuming a dust temperature and a dust emissivity value. FU05 adopted a dust temperature of T_{dust}=100 K and κ_ν=0.015 (1300/λ (μm)) cm^2 g^{−1} and derived a total gas+dust mass of 2 M_⊙ in the hot core FIRS 2. More recently, Palau et al. (2013) derived a similar value (1.8 M_⊙) assuming T_{dust}=50 K and κ_{1.3mm}=0.00899 cm^2 g^{−1}. Our results suggest that at least a fraction of the dust must be at T_{dust}=400 K. Assuming T_{dust}=400 K and κ_{1.3mm}=0.01 cm^2 g^{−1}, we obtain a lower limit to the gas+dust mass of 0.46 M_⊙. Therefore, the total gas+dust mass of the FIRS 2 hot core in uncertan in a factor of ∼4. In Table 5 we show the average molecular abundances in a region of 1.4^{′′} assuming M=1.8 M_⊙ and 0.46 M_⊙ for the hot core mass, respectively. When detected, we used the^{13}C isotopologue to determine the total average molecular column density which is more reliable. As discussed in Sect. 4, the uncertainties in the molecular column densities would add an error of a factor ≤4−5 to these values.

6.2. Comparison with the Orion hot core

The hot core associated with FIRS 2 is extraordinarily rich in complex molecules. We have detected glycolaldehyde and tentatively formamide that had been detected only in a few objects thus far. Glycolaldehyde was detected in Sgr B2 (Hollis et al. 2000, Halfen et al. 2006, Requena-Torres et al. 2008), the massive hot core G31.41+0.31 (Beltrán et al. 2009) and more recently towards the hot corino IRAS 16293-2422B (Jorgensen et al. 2012, Zapata et al. 2013). Formamide has been detected in Orion (Motiyenko et al. 2012), Sgr B2 (Belloche et al. 2013), a handful of massive prototypical hot cores (Adande et al. 2013) and IRAS 16293-2422 (Kahane et al. 2013). In Figs. A.1-4, we compare the FIRS 2 spectrum with that of the Orion hot core as observed with the 30m telescope (Tercero et al. 2010). Surprisingly, there is a good match between both spectra, both in number of lines and relative line intensities, suggesting that both hot cores have similar chemical characteristics. Of course, this is a qualitative comparison and we need to put it on quantitative grounds to establish firm conclusions.

In Table 6 and Fig. 3 we compare the molecular column densities in FIRS 2 and Orion KL. For this comparison, in FIRS 2, we have used the average column densities in a region of 1.4^{′′}. The reason is that the sizes of the emitting regions are not determined for most of the species (see Table 3). One needs to know the rotation temperature and the line opacities independently, to be able to determine the source size. In many cases we do not have detected the^{13}C isotopologue that would allow us to derive the line opacities. In others, the number of unblended lines is not enough to determine the rotation temperature and we had to assume a reasonable value. On the contrary, the number of molecules per beam is a quite well determined parameter as long as the emission is optically thin which is a reasonable assumption for many complex species. When detected, we used the^{13}C isotopologue to determine the total average column density.

Towards Orion KL, the molecular emission is formed of 4 physically different components: hot core, plateau, compact ridge and extended ridge. The plateau has a chemistry characteristic of a shocked region and is considered to be associated with the shocks produced by a past eruptive episode. The extended ridge is the parent cloud that hosts the cluster of young stars. The compact ridge is a small (∼15^{′′}) “U” shaped feature that is characterized for being very rich in complex O-bearing molecules. The hot core is a very compact source (6^{′′}-10^{′′}) particularly rich in complex N-bearing molecules. We cannot resolve different regions within the FIRS 2 hot core, therefore we consider that the FIRS 2 hot core is comparable to the hot core (HC) and the compact ridge (CR) Orion components together. In Table 6 we show the average column densities of the HC+CR Orion components in a region of 15^{′′}. To estimate this value,

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

we have summed up the column densities of the HC and CR weighted by their respective filling factors: 0.44 for HC (assuming a size of 10^{′′}) and 1 for the CR. When possible, we used the 13C isotopologues to determine the Orion column densities (see Table 6). We assume^{12}C/^{13}C=50 for Orion (Comito et al. 2005, Tercero et al. 2010). Some authors, like Neill et al. (2013) and Comito et al. (2005) used a size of 10^{′′} for the CR. We have multiplied their column densities by 0.44 to account for the different adopted source sizes. For CH_3CHO we have adopted the value of Turner (1991). This author did not distinguish among the different Orion components (hot core, plateau, compact ridge and extended ridge) and we have taken the total value. For this reason this point is drawn as an empty circle in Fig. 3. In the case of D_2CO, Turner (1990) assumed a source size of 15^{′′}×25^{′′} that is consistent with ours.

In Fig. 3 we compare the column densities of FIRS 2 and Orion normalized to methanol. Normalization is required if one wants to compare the relative abundances of the different species in the warm gas. Methanol is commonly used to make this kind of normalization in hot cores (Öberg et al. 2011). Instead we could have used methyl cyanide for the normalization but we would have obtained essentially the same trend. As it is clearly seen in Table 6, it would simply produce an increase in all the ratios by factor of 2.

Most of the relative molecular abundances in FIRS 2 agree with those in Orion within a factor of 5, which is quite good taking into account the uncertainty due to the unknown spatial structure of the molecular emission and opacity effects. Only a few molecules have abundances significantly different in both hot cores: CH_3OCHO, CH_3CH_2CN, HNCO and SO_2 have fractional abundances more than 10 times lower in FIRS 2 than in Orion. In the case of CH_3OCHO, we have not detected the 13C isotopologues in FIRS 2 and our column density could be slightly underestimated. As discussed in Sect. 4.3, our estimate is accurate within a factor of 4. Increasing the methyl formate by a factor of 4 would push the methyl formate back to the region within the two black lines in Fig. 3, although still in the lower end. In the case of HNCO, the lines of the main isotologue are blended with those of the^{13}C isotopologue preventing us from a direct estimate of the line opacities. Looking at the top of the Figure, there is a group of molecules that are more abundant in FIRS 2 by more than a factor of 4−5. These molecules are: CH_2DOH, D_2CO and CH_3CHO. As commented above, the value of CH_3CHO in Orion is uncertain. However the differences observed in CH_2DOH and D_2CO could be significant. In the following Section, we discuss possible scenarios to explain these differences.

6.3. Sequential formation of complex molecules in hot cores/corinos

Although gas phase reactions can play a role, surface chemistry dominates the formation of COMs. The large sensitivity of surface chemistry on physical parameters, especially the dust temperature, can also explain the observed chemical differentiation within a hot core and among different hot cores. For example, Caselli et al. (1993) found that complex N-bearing species are more easily formed if the dust temperature (T_{dust}) is about 40 K during the collapse phase. This is primarily due to the higher mobility of carbon and the shortage of hydrogen (H, H_2) on the grain surfaces. A similar argument has been used by Öberg et al. (2011) to explain the over-abundance of CH_{2/3}-rich molecules in hot cores and corinos compared with molecular ouflows. Öberg et al. (2011) studied a number of cores associated with outflows, low-mass cores observed with single-dish telescopes (tracing envelopes at ∼ 5000 AU spatial scales), low-mass cores observed with interferometers (tracing warmer material at ∼ 500 AU), and an average of high-mass hot molecular cores from Bisschop et al. (2007), and they found that HCO-rich molecules are in general more abundant than CH_{3/2}-rich molecules in outflows and envelopes of low-mass YSOs, while the situation is reversed for low-mass inner envelopes/disks and high-mass YSOs. They proposed a sequential formation of complex molecules, starting with HCO-rich molecules as long as CO ice is abundant, followed by CH_{3/2}-rich molecules at higher ice temperatures.

In Fig. 4 we present an updated version of the figure by Öberg et al. (2011) complemented with abundances of three intermediate-mass hot cores observed with interferometers (at ∼ 500 AU scales, from this work and Palau et al. 2011), and the new Orion data. In the Figure, symbols in warm colors (orange, red) correspond to CH_{3/2}-rich molecules, while symbols in cold colors (blue/black) correspond to HCO-rich molecules. Our new results for the intermediate-mass hot core FIRS 2 are in line with previous measurements towards IM hot cores at diskscales (∼ 500 AU). Putting all these data together, we do not find a clear trend for the abundances of the CH_{3/2}-rich and HCO-rich molecules with the stellar mass. Considering only interferometric observations, the CH_3CHO abundance seems to decreases with the stellar mass. However, the abundance of methyl formate, the only other HCO-rich molecule considered, is larger in Orion than in IM hot cores and hot corinos. Orion is the only source in which we have been able to use the^{13}C isotopologue to derive the methyl formate abundance. If the methyl formate lines were typically optically thick in hot cores/corinos, this would have produced an underestimate of the CH_3OCHO abundance in the rest of objects. Using the upper limit to the emission of the^{13}C isotopologue, we have estimated that the methyl formate abundance in FIRS 2 is accurate within a factor of 4. Even considering an uncertainty of a factor of 4 in the CH_3OCHO abundances towards low mass and IM YSOs, the [CH_3OCHO]/[CH_3OH] ratio would be larger in Orion than in these objects. Besides, the [CH_3OCHO]/[CH_3OH] ratio seems to increase from the low-mass to the IM sample. We can only compare two HCO-rich molecules in Fig. 4. Therefore we cannot know if methyl formate is a special case (see also Taquet et al. 2012). Further observations in IM and massive hot cores are required to have a deeper insight into the chemistry of this molecule and other HCO-rich species.

We have yet to discuss the deuterium fractions in FIRS 2 and Orion. Deuterated species whose deuteration requires surface chemistry, such as D_2CO, present higher abundances in the warm regions associated with low-mass protostars. Loinard et al. (2003) searched for the doubly deuterated form of formaldehyde (D_2CO) in a large sample of young stellar objects. D_2CO was detected in all low-mass protostars, with [D_2CO]/[H_2CO] ratios of 2−40%. On the other hand, no detection was obtained towards massive protostars (where [D_2CO]/[H_2CO]<0.5%). This is consistent with the value reported by Turner (1990) in Orion. If the hot cores associated with massive stars are older and/or significantly denser than those surrounding low-mass objects, gas phase chemistry could have had the time to reset the deuterium fractions to values close to the cosmic D/H ratio. The longer time of the evaporated molecules in gas phase in would also affect the abundances of the COMs that can be formed in warm gas-phase chemistry (e.g. CH_2CHCN).

An alternative explanation could be that the temperature of the envelope material accreting onto the high mass protostars is

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Fig. 4. Abundance of complex organic molecules relative to CH_3OH for different types of sources, after Öberg et al. (2011): from left to right, low-mass outflows, low-mass YSOs observed with single-dish (tracing envelopes), low-mass YSOs observed with interferometers (tracing the inner envelope/disk at ∼500 AU spatial scale), intermediate-mass YSOs observed with interferometers (also at 500 AU spatial scale, this work and Palau et al. 2011), and Orion (references in Table 6). Symbols with cold colors correspond to HCO-rich molecules (black: CH_3OCHO; blue: CH_3CHO), and symbols with warm colors correspond to CH_{3/2}-rich molecules (orange: CH_3OCH_3; red: CH_3CH_2OH).

larger than 30 K (Fontani et al. 2002). In this case the deuterium fractionation efficiency in the gas phase is strongly reduced before the hot core phase as the standard H_2D^+ route (H^+_3 +HD → H_2D^+ + H_2) also starts to proceed from left to right . Moreover, at T_{dust}>30 K there is no way that deuteration can be enhanced on the grain surfaces. The reason is that H and D are easily evaporated before reacting on the surface (see e.g. Cazaux et al. 2011). The higher temperature during the collapse would also affect the formation of COMs in grain mantles. As CO does not efficiently freezes-out at these values of T_{dust}, the formation of HCO-rich molecules would be strongly diminished too. As commented above, methyl formate could be an exception of this rule.

6.4. Carbon budget

We have used the column densities shown in Table 3 to estimate the Carbon gas phase budget in the FIRS 2 hot core. Apart from CO and its isotopologues, most of the Carbon is locked in methanol with a total column density of ∼3.4×10^{20} cm^{−2} in the compact component of the hot core. Taking into account the rest of molecules, the Carbon column density reaches to ∼4×10^{20} cm^{−2} in this small region. One problem to derive absolute abundances is that we do not know the total column density of gas in the inner R<0.05^{′′} region. Based on higher angular resolution observations, FU05 derived a size of 0.72^{′′}×0.52^{′′} for the continuum source that account for 75% of the continuum emission and a point source that contributes with 25% of the flux. Adopting this value for the fraction of continuum flux coming from the compact component of the hot core and a total gas mass of 0.46 M_⊙ (see Section 6.1), the total column density of molecular hydrogen would be 2×10^{25} cm^{−2} and the fractional abundance of the Carbon locked in COMs relative to H nuclei, ∼1.0×10^{−5}. This value is 36 times lower than the solar value of the Carbon abundance (C/H∼3.6×10^{−4}, Anders & Grevesse 1989) and suggests that methanol and COMs (at least those considered in this paper) are not the main reservoirs of Carbon in hot cores.

It is also useful to compare methanol with C^{18}O. Again we have the problem of the unknown spatial distribution of the C^{18}O emission within our interferometric beam. We can derive a lower limit to the C^{18}O abundance assuming that the emission is optically thin and fills the beam. Adopting T_{rot}=400 K, we derive N(C^{18}O)=1.5×10^{17} cm^{−2} and N(CO)=9.4×10^{19} cm^{−2}. This solution, however, is not compatible with the non-detection of the C^{18}O 9→8 line by Fuente et al. (2012) and we cannot reconcile the PdBI and Herschel results by lowering the temperature down to T_{rot}=200 K. The optically thick solution seems more reasonable. Assuming again that the gas temperature is 400 K and that the C^{18}O emission is optically thick (T_B≈T_{rot}), we derive an effective diameter of 0.15^{′′} for the C^{18}O emitting region. In this case, our results are compatible with the Herschel upper limit to the C^{18}O 9→8 line and the column density of CO would be >10^{22} cm^{−2} in the compact component of the hot core.

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

7. Conclusions

FIRS 2 is probably the youngest IM protostar studied thus far and, as such, an excellent template upon which to base interpretations of other IM and massive star forming regions. The interferometric observations presented in this paper proved that this IM protostar hosts a hot core extraordinarily rich in complex molecules.The gas kinetic temperature as measured with methyl cyanide, is around 400 K, similar to that of the Orion hot core and higher than typical rotation temperatures in hot corinos. A detailed comparison of the chemistry of FIRS 2 with Orion shows that the fractional abundances of most molecules relative to that of CH_3OH agree within a factor of 5, that is reasonable taking into account the uncertainties of our column density estimates. Only CH_3CH_2CN, HNCO, SO_2, CH_2DOH, D_2CO and CH_3CHO present a significant disagreement, with CH_3CH_2CN, HNCO and SO_2 being more abundant in Orion, and CH_2DOH, D_2CO and CH_3CHO, in FIRS 2. Since the physical conditions are similar in both hot cores, only different initial conditions (warmer pre-collapse and collapse phase in the case of Orion) and/or different crossing time of the gas in the hot core can explain this behavior. FIRS 2 is a YSO in which most of the accreting envelope still maintains an overall temperature lower than 30 K, allowing deuteration to proceed unhindered, while complex N-bearing molecules like CH_3CH_2CN are not efficiently formed, unlike the Orion hot core.

Acknowledgements. We thank the Spanish MINECO for funding support from grants CSD2009-00038, AYA2009-07304, and AYA2012-32032. DJ is supported by the National Research Council of Canada and by a Natural Sciences and Engineering Research Council of Canada (NSERC) Discovery Grant. A.P. is supported by the Spanish MICINN grant AYA2011-30228-C03-02 (co-funded with FEDER funds), and by the AGAUR grant 2009SGR1172 (Catalonia).

References

Adande, G. R., Woolf, N. J., & Ziurys, L. M. 2013, Astrobiology, 13, 439 Alonso-Albi, T., Fuente, A., Crimier, N., et al. 2010, A&A, 518, A52 Anders, E., & Grevesse, N. 1989, Geochim. Cosmochim. Acta, 53, 197 Bell, T.A., Cernicharo, J., Viti, S. et al, 2013, A&A accepted Belloche, A., Müller, H. S. P., Menten, K. M., Schilke, P., & Comito, C. 2013, A&A, 559, A47 Beltrán, M. T., Codella, C., Viti, S., Neri, R., & Cesaroni, R. 2009, ApJ, 690, L93 Beuther, H., Zhang, Q., Greenhill, L. J., et al. 2005, ApJ, 632, 355 Beuther, H., Zhang, Q., Reid, M. J., et al. 2006, ApJ, 636, 323 Bisschop, S. E., Jørgensen, J. K., Bourke, T. L., Bottinelli, S., & van Dishoeck, E. F. 2008, A&A, 488, 959 Blake, G. A., Sutton, E. C., Masson, C. R., & Phillips, T. G. 1987, ApJ, 315, 621 Bottinelli, S., Ceccarelli, C., Lefloch, B., et al. 2004b, ApJ, 615, 354 Bottinelli, S., Ceccarelli, C., Neri, R., et al. 2004a, ApJ, 617, L69 Bottinelli, S., Ceccarelli, C., Williams, J. P., & Lefloch, B. 2007, A&A, 463, 601 Brouillet, N., Despois, D., Baudry, A., et al. 2013, A&A, 550, A46 Carvajal, M., Margulès, L., Tercero, B., et al. 2009, A&A, 500, 1109 Cazaux, S., Tielens, A. G. G. M., Ceccarelli, C., et al. 2003, ApJ, 593, L51 Cazaux, S., Caselli, P., & Spaans, M. 2011, ApJ, 741, L34 Cernicharo, J., Kahane, C., Guelin, M., & Gómez-Gonzalez, J. 1988, A&A, 189, L1 Cernicharo, J. 2012, in Proceedings of the European Conference on Laboratory Astrophysics, Eur. Astron. Soc. Publ. Ser, eds. C. Stehlé, C. Joblin, & L. d’Hendecourt Cernicharo, J., Tercero, B., Fuente, A., et al. 2013, ApJ, 771, L10 Chin, Y.-N., Henkel, C., Whiteoak, J. B., Langer, N., & Churchwell, E. B. 1995, VizieR Online Data Catalog, 330, 50960 Comito, C., Schilke, P., Phillips, T. G., et al. 2005, ApJS, 156, 127 Daly, A. M., Bermúdez, C., López, A., et al. 2013, ApJ, 768, 81 Demyk, K., Bottinelli, S., Caux, E., et al. 2010, A&A, 517, A17 Esplugues, G. B., Tercero, B., Cernicharo, J., et al. 2013a, A&A, 556, A143 Esplugues, G.B., Cernicharo, J., Viti, S. et al, 2013b, A&A 559, 51 Fich, M., Johnstone, D., van Kempen, T. A., et al. 2010, A&A, 518, L86 Fuente, A., Neri, R., Martín-Pintado, J., et al. 2001, A&A, 366, 873

Fuente, A., Rizzo, J. R., Caselli, P., Bachiller, R., & Henkel, C. 2005b, A&A, 433, 535 Fuente, A., Neri, R., & Caselli, P. 2005a, A&A, 444, 481 (FU05) Fuente, A., Castro-Carrizo, A., Alonso-Albi, T., et al. 2009, A&A, 507, 1475 Fuente, A., Caselli, P., McCoey, C., et al. 2012, A&A, 540, A75 Halfen, D. T., Apponi, A. J., Woolf, N., Polt, R., & Ziurys, L. M. 2006, ApJ, 639, 237 Haykal, I., Carvajal, M., Tercero, B. et al., 2013, A&A, accepted Hollis, J. M., Lovas, F. J., & Jewell, P. R. 2000, ApJ, 540, L107 Johnstone, D., Fich, M., McCoey, C., et al. 2010, A&A, 521, L41 Kahane, C., Ceccarelli, C., Faure, A., & Caux, E. 2013, ApJ, 763, L38 Kolesniková et al., 2014, ApJ, in press (arXiv:1401.7810) Jørgensen, J. K., Bourke, T. L., Myers, P. C., et al. 2005, ApJ, 632, 973 Jørgensen, J. K., Bourke, T. L., Myers, P. C., et al. 2007, ApJ, 659, 479 Loinard, L., Castets, A., Ceccarelli, C., et al. 2003, SFChem 2002: Chemistry as a Diagnostic of Star Formation, 351 López, A., Tercero, B., Kisiel, Z. et al., submmitted to A&A Marcelino, N., Cernicharo, J., Tercero, B., & Roueff, E. 2009, ApJ, 690, L27 Margulès, L., Huet, T. R., Demaison, J., et al. 2010, ApJ, 714, 1120 Milam, S. N., Savage, C., Brewster, M. A., Ziurys, L. M., & Wyckoff, S. 2005, ApJ, 634, 1126 Motiyenko, R. A., Tercero, B., Cernicharo, J., & Margulès, L. 2012, A&A, 548, A71 Müller, H. S. P., Thorwirth, S., Roth, D. A., & Winnewisser, G. 2001, A&A, 370, L49 Müller, H. S. P., Schlöder, F., Stutzki, J., & Winnewisser, G. 2005, Journal of Molecular Structure, 742, 215 Neill, J. L., Crockett, N. R., Bergin, E. A., Pearson, J. C., & Xu, L.-H. 2013, ApJ, 777, 85 Neri, R., Fuente, A., Ceccarelli, C., et al. 2007, A&A, 468, L33 Palau, A., Fuente, A., Girart, J. M., et al. 2011, ApJ, 743, L32 Palau, A., Fuente, A., Girart, J. M., et al. 2013, ApJ, 762, 120 Parise, B., Castets, A., Herbst, E., et al. 2004, A&A, 416, 159 Peng, T.-C., Despois, D., Brouillet, N., et al. 2013, A&A, 554, A78 Pickett, H.M. 1991, J. Molec. Spectroscopy 148, 371 Pickett, H. M., Poynter, R. L., Cohen, E. A., et al. 1998, Journal of Quantitative Spectroscopy and Radiative Transfer, 60, 883 Pineda, J. E., Maury, A. J., Fuller, G. A., et al. 2012, A&A, 544, L7 Öberg, K. I., van der Marel, N., Kristensen, L. E., & van Dishoeck, E. F. 2011, ApJ, 740, 14 Requena-Torres, M. A., Martín-Pintado, J., Martín, S., & Morris, M. R. 2008, ApJ, 672, 352 Sánchez-Monge, Á., Palau, A., Estalella, R., et al. 2010, ApJ, 721, L107 Shevchenko, V. S., & Yakubov, S. D. 1989, Soviet Ast., 33, 370 Taquet, V., Ceccarelli, C., & Kahane, C. 2012, A&A, 538, A42 Tercero, B., Cernicharo, J., Pardo, J. R., & Goicoechea, J. R. 2010, A&A, 517, A96 Tercero, B., Vincent, L., Cernicharo, J., Viti, S., & Marcelino, N. 2011, A&A, 528, A26 Tercero, B., Kleiner, I., Cernicharo, J., et al. 2013, ApJ, 770, L13 Turner, B. E. 1990, ApJ, 362, L29 Turner, B. E. 1991, ApJS, 76, 617 Vastel, C., Phillips, T. G., Ceccarelli, C., & Pearson, J. 2003, ApJ, 593, L97 Zapata, L. A., Loinard, L., Rodríguez, L. F., et al. 2013, ApJ, 764, L14

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Appendix A: Tables and Figures

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Table A.1.Line identifications Freq (MHz) Molecular lines^1 Comments^2 218132 EE−(CH_3)_2CO 202,18-193,17,203,18-193,17,202,18-192,17 , 203,18-192,17, aGg’-(CH_2OH)_2, HCOOH 218143 U 218157 U 218163 AA−(CH_3)_2CO 202,18-193,17 ,CH_2OHCHO 218181 aGg’-(CH_2OH)_2 184,0-183,1 ,185,0-184,1 218199 O^{13}CS 18-17 218222 p-H_2CO 30,3-20,2 218238 aGg’-(CH_2OH)_2 2217,5-2117,4,2217,6-2117,5 218259 A-CH_3OCHO 319,23-318,24, CH_2OHCHO 218282 E-CH_3OCHO 17−3,14 -16−3,13 218298 A-CH_3OCHO 173,13-163,13 218316 CH_2DOH 52,4-51,5 218324 HC_3N 24-23, CH_2OHCHO 218336 U 218371 aGg’-(CH_2OH)_2 224,19-214,18 218380 aGg’-(CH_2OH)_2 2215,7-2115,6,2215,8-2115,7 218389 CH_3CH_2CN 243,21-233,20, CH_3OCOD 218404 A-CH_2DOCOH 185,14-175,13, S-CH_2DOCOH, CH_3OCOD 218440 E-CH_3OH 42-31 218460 NH_2CHO 101,9-91,8, T-CH_3CH_2OH 218475 p-H_2CO 32,2-22,1 218493 CH_3OCH_3 233,21-232,22 218519 E-CH_3OCOD 186,13-176,12 218526 A-CH_3OCOD 186,13-176,12 218541 HCOOD 103,7-93,6 218554 T-CH_3CH_2OH 215,16-214,17 218576 aGg’-(CH_2OH)_2 2213,10-2113,9,2213,9-2113,8 218585 A-CH_3OCHO 369,28-368,29 218594 A-CH_3OCHO 277,21-275,22 218611 U 218632 EE−(CH_3)_2CO 129,4-118,3 , CH_3OCHO 277,21-27−5,22 218655 T-CH_3CH_2OH 72,5-61,6 , CH_3OCHO ν_t=1 218672 A-CH_3CHO ν_t=1 287,22-285,23 218681 E-CH_3CHO ν_t=1 33−9,25-33−8,26 218688 CH_2DOH 174,13-165,12 218696 CH_2DOH 174,14-165,11 218707 aGg’-(CH_2OH)_2 2212,10-2112,9, 2212,11-2112,10 218730 S-CH_2DOCOH 194,16-184,15, wing of C_3H_2 60,6-51,5? 218738 CH_3CH_2CN ν_{13}=1 /ν_{21}=1 243,22-233,21 ,243,21-233,20, CH_3CHO ν_t=1 218760 p-H_2CO 32,1-22,0 218774 AE−(CH_3)_2CO 129,4-118,3 218782 U 218796 CH_2DOH 201,20-192,17, G-CH_3CH_2OH, CH_3OCOD 218815 E-CH_3OH ν_t=2 16−8-15−9 , AA−(CH_3)_2CO 218830 E-CH_3OCHO ν_t=1 1813,5-1713,4 218850 U 218860 HC_3N ν_7=1 24−1 -23−1 218873 aGg’-(CH_2OH)_2 2211,12-2111,11, 2211,11-2111,10 218903 OCS 18-17 218914 U 218922 U 218938 HCOOH 81,8-70,7 218955 A-^{13}CH_3OCHO 408,33-399,30 218967 E-CH_3OCHO ν_t=1 1812,6-1712,5, CH_2OHCHO, CH_2DOCOH, 13CH_3OCHO 218980 HNCO 101,10-91,9 , HN^{13}CO 219007 S-CH_2DOCOH 329,23-328,24 219019 S-CH_2DCH_2CN 271,27-261,26 219037 CH_2OHCHO 3910,30-399,31 Continued on next page

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Freq (MHz) Molecular lines^1 Comments^2 219067 CH_2OHCHO 272,25-272,26,272,25-271,26, CH_3OCHO ν_t=1,^{13}CH_3OCHO, CH_2DCH_2CN 219078 E-CH_3OCHO ν_t=1 283,25-282,26, AE-(CH_3)_2CO, EA-(CH_3)_2CO 219090 aGg’-(CH_2OH)_2 2210,13-2110,12,2210,12-2110,11,CH_3OCHO 219098 A-CH_2DOCOH 186,12-176,11,^{13}CH_3OCHO, CH_2OHCHO, HCOOH 219108 A-CH_3OCHO 347,28-345,29 219115 U 219123 CH_2OHCHO 293,26-292,27 219132 S-CH_2DOCOH 198,12-188,11,198,11-188,10 219143 U 219154 A-CH_3OCHO ν_t=1 1811,7-1711,6, 104,6-93,6 219171 OCS ν_2=1 18−1 -17−1 , T-CH_3CH_2OH, HC_3N ν_7=1 219188 EE−(CH_3)_2CO 55,1-54,1 219196 U 219204 CH_2DOH 205,16-196,13,205,15-196,14 219220 AE-(CH_3)_2CO 211,20-202,19,212,20-201,19, EA-(CH_3)_2CO, CH_3CH_2CN ν_{13}/ν_{21}=1 219228 CH_2OHCHO 315,27-313,28 219242 A-CH_3OCOD 210,21-201,20, 211,21-201,20, 210,21-200,20, 211,21-200,20 , EE-(CH_3)_2CO 219264 AA-(CH_3)_2CO 211,20-202,19, 212,20-201,19 , CH_3OCHO 219276 SO_2 227,15-236,18 219295 S-CH_2DCH_2CN 263,24-253,23 , CH_3CHO 219305 CH_3OCH_3 316,26-307,23 , CH_2OHCHO 219311 AA-(CH_3)_2CO 129,4-118,3 219321 CH_3CH_2CN ν_{13}=1 /ν_{21}=1 251,25-241,24 , 252,25-242,23 , CH_3OCHO ν_t=1 219330 E-CH_3OCHO ν_t=1 18−15,4-17−15,3 219341 H^{13}COOH 100,10-90,9 219355^{34}SO_2 111,10-100,10 219370 S-CH_2DCH_2CN 2612,14-2512,13, 2612,15-2512,14 219386 aGg’-(CH_2OH)_2 229,14-219,13, 229,13-219,12 219389 U 219398 OCS ν_2=1 18-17 219411 E-CH_3OCHO ν_t=1 180,8-170,7 219441 U 219467 CH_3OCH_3 285,24-276,21 , CH_3CH_2CN, AE-(CH_3)_2CO, EA-(CH_3)_2CO 219479 CH_3OCHO ν_t=1 18−14,5-17−14,4 ,CH_3OCHO 219490 DC_3N 26-25 219506 CH_3CH_2CN 242,22-232,21 219512 U 219541 aGg’-(CH_2OH)_2 222,21-212,20 219550 HNCO 104,6-94,5, 104,7-94,6 , CH_3OH Partially overlapped with C^{18}O 219560 C^{18}O 2-1 219570 A-CH_3OCHO ν_t=1 1815,4-1715,3, 1815,3-1715,2 , 1816,2-1716,1, 1816,3-1716,2 Partially overlapped with C^{18}O 219580 aGg’-(CH_2OH)_2 221,21-211,20 , CH_3OCHO 219584 A-CH_3OCHO ν_t=1 1813,6-1713,5, 1813,5-1713,4 , CH_3OCHO 219593 E-CH_3OCHO 28−9,19 -28−8,20, CH_3OCOD,CH_2OHCHO 219600 E-CH_3OCHO 309,22-308,23 219607 E-CH_3OCHO 305,26-30−3,27 , EE-(CH_3)_2CO 219622 A-CH_3OCHO ν_t=1 1812,6-1712,5, 1812,7-1712,6 219642 E-CH_3OCHO ν_t=1 18−13,6-17−13,5 219657 HNCO 103,7-93,6, HN^{13}CO 219674 A-CH_3OCHO 305,26-303,27 219696 A-CH_3OCHO ν_t=1 1811,8-1711,7, 1811,7-1711,6 219705 A-CH_3OCHO ν_t=1 184,15-174,14 219720 E-CH_3OCHO ν_t=1 32−9,24-32−8,25 , 28−4,25-282,26 219735 HNCO 102,9-92,8, 102,8-92,7 , HN^{13}CO 219751 AA-(CH_3)_2CO 338,25-333,26, 339,25-337,26 219764 E-CH_3OCHO ν_t=1 189,9-179,8 , aGg’-(CH_2OH)_2 204,16-194,15 219780 A-CH_3CHO ν_t=2 111,10-101,9 , CH_3OCHO ν_t=1 219798 HNCO 101,10-90,9 219804 aGg’-(CH_2OH)_2 228,15-218,14, HN^{13}CO Continued on next page

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Freq (MHz) Molecular lines^1 Comments^2 219823 A-CH_3OCHO ν_t=1 1810,9-1710,8, 1810,8-1710,7 , AE-(CH_3)_2CO, EA-(CH_3)_2CO, CH_3CHO 219863 U 219876 U 219894 U 219900 U CH_2CHCN 102,9 -91,8 219908 o-H_2^{13}CO 31,2-21,1 219916 U E-CD_3CN 145-135 219949 SO 56-45 219965 U A-CD_3CN 143-133 219980 U E-CD_3CN 142-132 219991 U A-CD_3CN 140-130 220030 CH_3OCHO ν_t=1 189,10-179,9, 189,9-179,8 220037 HCOOH 100,10-90,9 , CH_3OCHO ν_t=1 220054 CH_2OHCHO 3510,26-359,27, 220077 E-CH_3OH 80,8-71,6 , CH_2DOH 220094 aGg’-(CH_2OH)_2 2411,13-2410,15, 2411,14-2410,14 220140 U 220155 T-CH_3CH_2OH 243,22-242,23 220167 E-CH_3OCHO 17−4,13 -16−4,12, AA-(CH_3)_2CO 220178 o-H_2CCO 111,11-101,10 220190 A-CH_3OCHO 174,13-164,12 220196 CH_2OHCHO 76,2-65,1 , 76,1-65,2 220203 CH_2OHCHO 114,7-103,8 220225 U 220235 E-CH_3CN 1211-1111 220243 U 220258 E-CH_3OCHO ν_t=1 188,10-178,9 , CH_2DOCOH 220270 U 220279 U 220300 A-CH_2DOCOH 201,19-191,18 , CH_3^{13}CN 220307 E-CH_3OCHO ν_t=1 18−10,9-17−10,8 220321 A-^{13}CH_3OH 177,11-186,12,177,10-186,13 , CH_3CN 220332 U 220345 U CH_2CHCN 94,5-103,8 , G+CH_3CH_2OH CH_2DOCOH 220355 AE-(CH_3)_2CO 221,22-211,21,220,22-210,21, EA-(CH_3)_2CO 220361 EE-(CH_3)_2CO 220,22-211,21,221,22-211,21 ,221,22-210,21,220,22-210,21 220368 A-CH_3OCHO ν_t=1 188,11-178,10, 188,10-178,9 , AA-(CH_3)_2CO, EA-(CH_3)_2CO 220390 H^{13}CC_2N 25-24 Partially blended with^{13}CO 220398^{13}CO 2-1, CH_3OH 220403 A-CH_3CN 129-119, aGg’-(CH_2OH)_2 Partially blended with^{13}CO 220409 E-CH_3OCHO ν_t=1 18−4,15-17−4,14 Partially blended with^{13}CO 220417 A-CH_3OCHO ν_t=1 183,16-172,15 220427 U 220446 A-CH_3CHO 214,18-221,21 220466 CH_2OHCHO 202,18-193,17, AE-(CH_3)_2CO 220476 E-CH_3CN 128-118 220486 A-CH_3^{13}CN 126-116 220498 aGg’-(CH_2OH)_2 227,15-217,14 220504^{33}SO_2 271-2728, 271-2727 220525 A-CH_3OCHO ν_t=1 104,6-93,7 220532 E-CH_3^{13}CN 125-115 220540 E-CH_3CN 127-117 220551 CH_2DOH 171,16-170,17 220570 E-CH_3^{13}CN 214,18-221,21 220585 HNCO 101,9-91,8 220595 A-CH_3CN 126-116 220602 T-CH_3CH_2OH 131,13-120,12 220606 E-CH_3OCHO ν=1 18−3,16-172,15 220622 E-CH_3^{13}CN 122-112 Continued on next page

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Freq (MHz) Molecular lines^1 Comments^2 220640 E-CH_3CN 125-115 220647 E-CH_3OCHO ν_t=1 18−9,10-17−9,9 220662 CH_3CH_2CN 252,24-242,23, EE- (CH_3)_2CO 220679 E-CH_3CN 124-114 220695 AE-(CH_3)_2CO 295,25-294,26, 294,25-293,26 CH_2CHCN ν=1 103,7-102,8 220701 CH_2OHCHO 409,32-408,33 220709 A-CH_3CN 123-113 220730 E-CH_3CN 122-112 220745 A-CH_3CN 120-110, E-CH_3CN 121-111 220764 EE-(CH_3)_2CO 1111,9-1010,0 220785 E-CH_3OCHO 28−3,25 -283,26, CH_3OCHO ν_t=1 220793 U 220814 E-CH_3OCHO 28−3,25 -28−2,26 220847 CH_3OCH_3 244,20-235,19 220857 U 220866 CH_3OCHO ν_t=1 192,17-183,16, CH_3OCHO , G-CH_3CH_2OH, CH_3CHO ν_t=1 220887 A-CH_3OCHO 1817,1-1717,0, 1817,2-1717,1 220892 CH_3OCH_3 234,20-233,21 , CH_3OCHO 220901 E-CH_3OCHO 18−17,1 -17−17,0 220913 CH_3OCHO ν_t=1 187,12-177,11, CH_3OCHO 220926 A-CH_3OCHO 1816,3-1716,2, 1816,2-1716,1,CH_2DOCOH, AE-(CH_3)_2CO, EA-(CH_3)_2CO 220936 E-CH_3OCHO 18−16,2 -17−16,1 220946 A-CH_3OCHO ν=1 187,11-177,10, CH_3OCHO 220961 AA-(CH_3)_2CO 1111,1-1010,0,1111,0-1010,1,CH_3OCHO ,CH_3NC 220978 A-CH_3OCHO 1815,4-1715,3, 1815,3-1715,2,CH_3CN ν_8=1,EE-(CH_3)_2CO 220985 E-CH_3OCHO ν_t=1 187,11-177,10,CH_3OCHO 220989 S-CH_2DOCOH 196,13-186,12 220999 G-CH_3CH_2OH 130,13-120,12,CH_3OCHO 221008 aGg’-(CH_2OH)_2 214,18-204,17,CH_2OHCHO 221013 E-CH_3NC 115-105 221026 A-CH_3OCHO 366,30-365,31 221038 aGg’-(CH_2OH)_2 226,17-216,16 221049 A-CH_3OCHO 1814,5-1714,4,1814,4-1714,3 221059 CH_3CN ν_8=1 128,1-118,1,CH_3NC 221066 E-CH_3OCHO 379,29-378,30 221077 A-CH_3OCHO 299,21-298,22, CH_3CN ν_8=1 221087 E-CH_3OCHO 299,21-298,22 221092 A-CH_3NC 113-103 221100 aGg’-(CH_2OH)_2 225,18-215,17 221112 E-CH_3OCHO ν_t=1 18−8,11-17−8,10 ,^{34}SO_2 221119 E-CH_3NC 112-102 221132 E-CH_3NC 111-101,CH_3CN ν_8=1, CH_3OCHO ν_t=1 221138 A-CH_3NC 110-100 221141 A-CH_3OCHO 1813,6-1713,5,1813,5-1713,4 , E-CH3OCHO 18−13,5 -17−13,4 221157 E-CH_3OCHO 1813,6-1713,5 , CH_2DOH, CH_3OCOD 221165 A-CH_3OCHO ν=1 378,30-377,31 221178 CH_2DOH 62,5-61,6, HDCS 71,6-61,5 221191 p-D_2CO 41,4-31,3 221198 CH_3OCH_3 275,22-274,23 ,CH_3CN ν_8=1 221210 CH_3CN ν_8=1 128,2-118,2 221216 E-CH_3CHO ν_t=2 112,10-102,9 221222 A-CH_3CHO ν_t=1 221,21-220,22 221253 CH_3CN ν_8=1 125,1-115,1 221266 A-CH_3OCHO 1812,7-1712,6,1812,6-1712,5 ,CH_3CN ν_8=1 127,2 -117,2 221273 CH_2DOH 51,5-41,4 221285 E-^{13}CH_3OH 8−1,8 -70,7, CH_3OCHO 221298 A-CH_3CHO 133,10-132,11, CH_3CN ν_8=1 124,1-114,1, CH_3OCHO 221312 CH_3CN ν_8=1 126,2-116,2, NH_2CHO 221326 U 221338 aGg’-(CH_2OH)_2 233,21-223,20,CH_3CN ν_8=1 123,1-113,1 , aGg’-(CH_2OH)_2 221350 CH_3CN ν_8=1 125,2-115,2 Continued on next page

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Freq (MHz) Molecular lines^1 Comments^2 221367 CH_3CN ν_8=1 122,1-112,1 221382 CH_3CN ν_8=1 124,2-114,2 221392 CH_2DOH 101,10-90,9,CH_3CN ν_8=1 121,1-111,1 221404 CH_3CN ν_8=1 123,2-113,2, CH_2DOCOH,CH_3OCHO 221423 A-^{13}CH_3OH ν_t=1 61,6 - 72,5, CH_3OCHO , CH_3CN ν_8=1 221433 A-CH_3OCHO 1811,8-1711,7,1811,7-1711,6 , CH_3CH_2CN ν_{13}/ν_{21}=1 221445 E-CH_3OCHO 1811,8-1711,7 , CH_3CH_2CN ν_{13}/ν_{21}=1 221465 CH_2OHCHO 3410,25-349,26 221480 E-CH_3CHO ν_t=1 238,15-247,17, CH_3CHO ν_t=2 221494 aGg’-(CH_2OH)_2 125,8-114,8 221500 EE-(CH_3)_2CO 272,25-272,26,272,25-271,26 ,273,25-272,26,273,25-271,26 221519 U 221526 EA-(CH_3)_2CO 3120,11-3117,14 221534 U 221547 U 221560 A-CH_2DOCOH 76,2-65,1,76,1-65,2, S-CH_2DOCOH 213,18-204,17,509,41-508,42 221566 U 221582 aGg’-(CH_2OH)_2 184,15-173,14 221597 U 221605 U 221627 CH_3CN ν_8=1 121,2-11−1,2 221649 E-CH_3OCHO 18−10,8 -17−10,7 221660 A-CH_3OCHO 1810,9-1710,8,1810,8-1710,7 , E-CH_3OCHO 184,15-174,14

1 Lines are ordered from major to minor contribution to the total integrated flux according with our model. 2 The lines in this column correspond to doubtful identifications.

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Table A.2.Line identifications (FU05) (MHz) Molecular lines^1 Comments^2 228140 G-CH_3CH_2OH 18_{5,14}-18_{4,15} 228151 OC^{33}S 19-18 228167 AE-(CH_3)_2CO 34_{9,26}-34_{8,27},34_{8,26}-34_{7,27}, EA-(CH_3)_2CO 34_{9,26}-34_{8,27},34_{8,26}-34_{7,27},CH_3CH_2CN 228186 U 228199 HCOOH 21_{6,16}-22_{5,17} 228211 CH_3OCHO ν_t=1 18_{3,15}-17_{3,14} 228231 CH_2DOH 11_{2,9}-11_{1,10} 228246 CH_2DOH 15_{2,13}-15_{1,14} 228257 U 228272 A-CH_3OCHO 24_{9,16}-24_{8,17}, S^{18}O,CH_3OCOD 228293 A-CH_3OCOD 18_{4,14}-17_{4,13} 228307 HC_3N ν_7=1 25_1-24_1 , EE-CH_3COCH_3 228336 U CH_2CHCN 16_{3,14}-16_{2,15} 228359 E-CH_3OCHO 24_{−9,15} -24_{8,17},CH_3OCHO ν_t=1,CH_2DCH_2CN, aGg’-(CH_2OH)_2 224374 U 228384 U 228410 H^{13}COOH 10_{2,8}-9_{2,7} 228436 CH_3OCH_3 26_{3,23}-25_{4,21}, 26_{3,24}-25_{4,21} 228439 A-CH_2DOCOH 19_{9,10}-18_{9,9},19_{9,10}-18_{9,10},19_{9,11}-18_{9,9} ,19_{9,11}-18_{9,10},CH_3OCOD, HCOOH 228448 A-CH_3OCOD 20_{2,18}-19_{2,17}, AA-(CH_3)_2CO 228464 E-CH_3OCOD 19_{−9,10} -18_{−9,9} , CH_3OCHO ν_t =1 228483 CH_3CH_2CN 25_{2,23}-24_{2,22},CH_3OCOD 228490 G+CH_3CH_2OH 8_{5,3} -8_{4,4}, 8_{5,4}-8_{4,5} Undetected 228500 AE-(CH_3)_2CO 12_{10,3}-11_{9,2} 228512 G-CH_3CH_2OH 15_{5,10}-15_{4,11}, AE-(CH_3)_2CO, EA-(CH_3)_2CO 228526 G-CH_3CH_2OH 17_{5,13}-17_{4,14} 228544 HCOOH 10_{2,8}-9_{2,7} 228559 G+CH_3CH_2OH 7_{5,2} -7_{4,3}, 7_{5,3}-7_{4,4} Undetected 231060 OCS 19-18 231077 U OCS wing?, CH_3OCHO ν_t=1 231102 U 231114 E-CH_3CHO 9_{3,6}-9_{2,7} 231127 aGg’-(CH_2OH)_2 23_{7,16}-22_{7,15} 231144 o-H_2^{13}CS 7_{3,5}-6_{3,4} ,7_{3,4}-6_{3,3} , CH_3OCHO ν_t=1, CH_3CHO ν_t=1 231167 E-CH_3CHO 10_{10,2}-11_{10,1} 231188 H^{13}COOH 10_{1,9}-9_{1,8} ,CH_3OCHO , CH_3CHO contaminated with^{13}CS wings? 231200 A-CH_3OCHO 21_{9,12}-21_{8,13},E-CH_3OCHO 21_{−9,12} -21_{−8,13},E-CH_3CHO contaminated with^{13}CS wings? 231220^{13}CS 5-4 231226 A-CH_3CHO 12_{9,3}-11_{9,2},12_{9,4}-11_{9,3} ,E-CH_3CHO 12_{7,5}-11_{7,4} 231232 A-CH_3CHO 12_{8,4}-11_{8,3},12_{8,5}-11_{8,4} ,E-CH_3CHO 12_{8,5}-11_{8,4} , CH_3OCHO ν_t =1 contaminated with^{13}CS wings? 231245 A-CH_3CHO 12_{7,6}-11_{7,5},12_{7,5}-11_{7,4} ,CH_3OCHO ν_t=1 231255 U 231268 A-CH_3CHO 12_{6,7}-11_{6,6},12_{6,6}-11_{6,5} , E-CH_3CHO 12_{7,6}-11_{7,5} 231280 A-CH_3OH 10_{2,−1} -9_{3,−1}, CH_3CHO 231293 U 231311 CH_3CH_2CN 26_{1,25}-25_{1,24},27_{0,27}-26_{1,26} ,24_{2,23}-23_{1,22}, CH_3CHO 231329 A-CH_3CHO 12_{5,8}-11_{5,7},12_{5,7}-11_{5,6} 231344 OCS ν_2=1 19_{−1}-18_{−1} 231369 E-CH_3CHO 12_{5,7}-11_{5,6},12_{5,8}-11_{5,7} 231383 E-CH_3CHO ν=1 12_{5,8}-11_{5,7} 231410 o-D_2CO 4_{0,4} -3_{0,3} 231417 E-CH_3COOH ν=1 19_{−16,4}-18_{−16,3} 231454 A-CH_3CHO 12_{4,9}-11_{4,8} 231466 A-CH_3CHO 9_{3,6}-9_{2,7} 231483 E-CH_3CHO 12_{4,8}-11_{4,7} 231506 HCOOH 10_{1,9}-9_{1,8} , CH_3CHO 231525? aGg’-(CH_2OH)_2 23_{6,18}-22_{6,17} 231533? U 231560 T-CH_3CH_2OH 20_{5,16}-20_{4,17}

1 Lines are ordered from major to minor contribution to the total integrated flux according with our model. 2 The lines in this column correspond to doubtful identifications.

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Fig. A.1. Comparison of the interferometric spectra towards NGC 7129 - FIRS 2 (black line) with the single-dish spectrum of Orion KL (red line). The Orion spectra have been provided by B. Tercero and J. Cernicharo and multiplied by a factor 0.43 for an easier comparison. The spectrum was observed towards: 5^h35^m14.^s5, −5^∘22^′30.^{′′}0 (J2000) and is centered at a velocity of 7 km s^{−1}. Lines are labelled in red. When several lines are blended, only the most intense ones are indicated. In blue, the spectra synthesized with the parameters shown in Table 3. The intensity scale is brightness temperature.

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Fig. A.2. The same as Fig. A.1.

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Fig. A.3. The same as Fig. A.1.

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Fig. A.4. The same as Fig. A.1.

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Fig. A.5. In blue, our synthetic spectrum superposed to the interferometric spectra published by FU05.

Table A.3. CH_3CN ν=0 line parameters^1 N^2 Quantum numbers: up-low^3 ν(MHz) E_u(K)^4 A_{ul} (s^{−1})^5 Sij^6 gu^7 W (K km s^{−1})^8 1 12 11 11 11 220235.047 923.4 1.469E-04 1.92 25 1.95(1.95) 2 12 10 11 10 220323.643 774.0 2.813E-04 3.67 25 4.73(1.38) Blended with A-^{13}CH_33OH 3 12 8 11 8 220475.814 517.6 5.125E-04 6.67 25 7.57(1.17) 4 12 7 11 7 220539.328 410.6 6.091E-04 7.92 25 10.18(6.0) 5 12 4 11 4 220679.287 175.1 8.223E-04 10.7 25 27.05(10.63) 6 12 2 11 2 220730.259 89.4 9.000E-04 11.7 25 29.82(6.74) 7 12 1 11 1 220743.008 68.0 9.195E-04 11.9 25 58.83(7.66) 7 12 0 11 0 220747.259 68.9 9.259E-04 12.0 25 8 12 6 11 6 220594.426 325.9 3.465E-04 9.00 50 19.37(6.83) 9 12 3 11 3 220709.015 133.2 4.338E-04 11. 50 31.35(10.23) 1Exponential notation: 1.469E-04=1.469×10^{−4} ;^2Index to enumerate the line features in the spectrum (blended lines share the same index); 3Quantum numbers of the upper and lower leves of the transitions;^4Energy of the upper level;^5 Einstein coefficient of spontaneous emission; 6Line strength defined as |μ_{i j}|^2 = S_{i j}μ^2 where μ is the dipole moment;^7Degeneracy of the upper level;^8Velocity integrated intensity

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Table A.4. CH_3CN ν_8=1 (E_{vib}=525.17 K) line parameters^1 N^2 Quantum numbers: up-low^3 ν(MHz) E_{Ru} (K)^4 A_{ul} (s^{−1})^5 Sij^6 gu^7 W (K km s^{−1})^8 1 12 8 1 12 11 8 1 11 221059.437 637.3 1.906E-03 24.6 25 3.63(1.57) 1 12 8 1 13 11 8 1 12 221059.797 637.3 1.923E-03 26.8 27 1 12 8 1 11 11 8 1 10 221059.828 637.3 1.904E-03 22.6 23 2 12 -1 2 11 11 1 2 10 221199.140 68.1 1.705E-03 20.2 23 17.62(8.89) Blended with CH_3OCH_3 2 12 -1 2 12 11 1 2 11 221199.140 68.1 1.708E-03 22.0 25 2 12 -1 2 13 11 1 2 12 221199.156 68.1 1.718E-03 23.9 27 3 12 8 2 12 11 8 2 11 221209.781 423.9 9.551E-04 12.3 25 2.72 (2.0) 3 12 8 2 13 11 8 2 12 221210.140 423.9 9.634E-04 13.4 27 3 12 8 2 11 11 8 2 10 221210.172 423.9 9.537E-04 11.3 23 4 12 5 1 12 11 5 1 11 221252.937 319.3 2.844E-03 36.6 25 5.65(2.27) 4 12 5 1 13 11 5 1 12 221252.937 319.3 2.863E-03 39.8 27 4 12 5 1 11 11 5 1 10 221252.937 319.3 2.846E-03 33.7 23 5 12 7 2 12 11 7 2 11 221265.547 330.5 2.269E-03 29.2 25 19.98(2.08) Blended with CH_3OCHO 5 12 7 2 13 11 7 2 12 221265.547 330.5 2.288E-03 31.8 27 5 12 7 2 11 11 7 2 10 221265.547 330.5 2.272E-03 26.9 23 6 12 4 1 12 11 4 1 11 221299.875 241.8 1.532E-03 19.7 25 4.19(4.0) Blended with CH_3OCHO 6 12 4 1 13 11 4 1 12 221299.875 241.8 1.540E-03 21.4 27 6 12 4 1 11 11 4 1 10 221299.875 241.8 1.529E-03 18.1 23 7 12 6 2 12 11 6 2 11 221311.953 251.2 1.291E-03 16.6 25 3.35(3.0) 7 12 6 2 13 11 6 2 12 221311.953 251.2 1.303E-03 18.1 27 7 12 6 2 11 11 6 2 10 221311.953 251.2 1.293E-03 15.3 23 8 12 3 1 12 11 3 1 11 221338.218 178.5 1.618E-03 20.8 25 6.28(5.34) Blended with aGg’-(CH_2OH)_2 8 12 3 1 11 11 3 1 10 221338.218 178.5 1.615E-03 19.1 23 8 12 3 1 13 11 3 1 12 221338.218 178.5 1.628E-03 22.6 27 9 12 5 2 12 11 5 2 11 221350.375 186.1 1.424E-03 18.3 25 4.52(2.42) 9 12 5 2 13 11 5 2 12 221350.375 186.1 1.433E-03 19.9 27 9 12 5 2 11 11 5 2 10 221350.375 186.1 1.421E-03 16.8 23 10 12 2 1 12 11 2 1 11 221367.672 129.5 3.354E-03 43.1 25 9.47(4.30) Blended with A-^{13}CH_3OH 10 12 2 1 11 11 2 1 10 221367.672 129.5 3.349E-03 39.6 23 10 12 2 1 13 11 2 1 12 221367.672 129.5 3.379E-03 46.9 27 11 12 4 2 12 11 4 2 11 221380.734 135.3 3.066E-03 39.4 25 16.77(1.81) 11 12 4 2 11 11 4 2 10 221380.734 135.3 3.062E-03 36.2 23 11 12 4 2 13 11 4 2 12 221380.734 135.3 3.084E-03 42.8 27 12 12 0 2 11 11 0 2 10 221394.156 74.3 1.726E-03 20.4 23 18.99(1.15) Blended with CH_2DOH 12 12 0 2 12 11 0 2 11 221394.156 74.3 1.728E-03 22.2 25 12 12 0 2 13 11 0 2 12 221394.156 74.3 1.737E-03 24.1 27 13 12 3 2 12 11 3 2 11 221403.812 98.7 1.619E-03 20.8 25 7.49(2.09) Blended 13 12 3 2 11 11 3 2 10 221403.812 98.7 1.616E-03 19.1 23 13 12 3 2 13 11 3 2 12 221403.812 98.7 1.629E-03 22.6 27 14 12 2 2 12 11 2 2 11 221422.375 76.3 1.674E-03 21.5 25 15.61(7.19) Blended with A-^{13}CH_3OH 14 12 2 2 11 11 2 2 10 221422.375 76.3 1.676E-03 19.8 23 14 12 2 2 13 11 2 2 12 221422.375 76.3 1.687E-03 23.4 27 15 12 1 2 11 11 -1 2 10 221625.906 68.2 1.715E-03 20.2 23 9.94(2.67) 15 12 1 2 12 11 -1 2 11 221625.906 68.2 1.718E-03 22.0 25 15 12 1 2 13 11 -1 2 12 221625.906 68.2 1.728E-03 23.9 27 1Exponential notation: 1.469E-04=1.469×10^{−4} ;^2Index to enumerate the line features in the spectrum (blended lines share the same index); 3Quantum numbers of the upper and lower leves of the transitions;^4Rotational energy of the upper level;^5 Einstein coefficient of spontaneous emission;^6Line strength defined as |μ_{i j}|^2 = S_{i j}μ^2 where μ is the dipole moment;^7Degeneracy of the upper level;^8Velocity integrated intensity

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Table A.5. CH_3OCHO line parameters^1 N Quantum numbers: up-low ν(MHz) E_u(K) A_{ul} (s^{−1}) Sij gu W (K km s^{−1}) ν_t=0 1 17 3 14 16 3 13 218297.867 99.7 1.506E-04 16.4 35 10.21(8.88) 2 17 4 13 16 4 12 220190.266 103.1 1.522E-04 16.1 35 18.05(2.43) 3 33 5 28 33 5 29 220432.932 357.4 5.710E-06 1.16 67 9.36(3.90) 4 17 -3 14 16 -3 13 218280.838 99.1 1.507E-04 43.6 35 9.96(2.90) 5 17 -4 13 16 -4 12 220166.852 102.6 1.522E-04 42.9 35 13.96(0.37) 6 18 13 6 17 13 5 221158.521 212.4 7.789E-05 22.9 37 10.09(3.66) Blended with CH_2DOH 7 18 12 7 17 12 6 221280.890 195.8 9.063E-05 26.6 37 18.00(4.90) Blended with^{13}CH_3OH 8 18 -11 7 17 -11 6 221424.615 180.6 1.024E-04 30.0 37 16.19(4.35) Blended with CH_3CN ν_t=8 9 18 11 8 17 11 7 221445.622 180.6 1.025E-04 30.0 37 7.23(3.90) 10 18 -10 8 17 -10 7 221649.374 166.7 1.134E-04 33.1 37 6.51(0.65) ν_t=1 1 18 4 15 17 4 14 219704.898 299.5 1.507E-04 45.2 37 4.69(3.67) 2 18 9 9 17 9 8 219764.090 342.7 1.198E-04 35.9 37 6.16(4.18) 3 18 10 9 17 10 8 219822.160 355.1 1.105E-04 33.1 37 8.99(1.76) 3 18 10 8 17 10 7 219822.161 355.1 1.105E-04 33.1 37 4 18 9 10 17 9 9 220030.289 342.4 1.201E-04 35.9 37 7.60(7.00) 4 18 9 9 17 9 8 220030.339 342.4 1.201E-04 35.9 37 5 18 -10 9 17 -10 8 220307.810 354.8 1.115E-04 33.1 37 3.65(0.60) 6 18 7 12 17 7 11 220913.784 321.3 1.375E-04 40.6 37 8.33(4.37) 7 18 -8 11 17 -8 10 221111.015 330.7 1.308E-04 38.5 37 3.29 (2.88) 1Same notation as Table A.5.

Table A.6. CH_2DOH line parameters^1 N Quantum numbers: up-low ν(MHz) E_u(K) A_{ul} (s^{−1}) Sij gu W (K km s^{−1}) 1 5 2 4 1 5 1 5 1 218316.390 58.7 1.818E-05 0.83 11 7.07(1.27) 2 20 5 15 1 19 6 14 0 219206.135 557.6 2.977E-05 4.99 41 2.05(1.16) 3 5 1 5 0 4 1 4 0 220071.805 35.8 2.614E-05 2.89 11 16.05(0.60) Blended with CH_3OH 4 17 1 16 0 17 0 17 0 220552.586 335.9 7.545E-05 10.6 35 11.74(5.35) 5 5 1 5 2 4 1 4 2 221273.004 54.7 3.371E-05 3.66 11 8.25(3.23) 6 10 1 10 0 9 0 9 1 221391.766 120.2 5.674E-05 4.73 21 21.17(1.58) Blended with CH_3CN ν_8=1 7 20 2 18 2 20 1 19 2 221154.575 486.0 7.322E-05 12.0 41 13.20(2.10) Blended with methyl formate 8 6 2 5 1 6 1 6 1 221178.153 71.6 2.067E-05 1.07 13 12.48(5.20) Blended with HDCS 1Same notation as Table A.5.

Table A.7. HNCO line parameters^1 N Quantum numbers: up-low ν(MHz) E_u(K) A_{ul} (s^{−1}) Sii gu W (K km s^{−1}) 1 10 1 10 9 1 9 218981.009 101.1 1.462E-04 9.79 21 22.71(1.42) 2 10 3 8 9 3 7 219656.769 433.0 1.235E-04 8.19 21 10.68(1.48) 2 10 3 7 9 3 6 219656.771 433.0 1.235E-04 8.19 21 3 10 2 9 9 2 8 219733.850 228.3 1.383E-04 9.17 21 27.10(1.89) 3 10 2 8 9 2 7 219737.193 228.3 1.383E-04 9.17 21 4 10 0 10 9 0 9 219798.274 58.0 1.510E-04 1.00E+01a 21 27.85(4.74) 5 10 1 9 9 1 8 220584.751 101.5 1.494E-04 9.79E+00a 21 22.70(4.17) 1Same notation as Table A.5.

A. Fuente et al.: The hot core towards the intermediate mass protostar NGC 7129 FIRS 2

Table A.8. aGg’-(CH_2OH)_2 line parameters^1 N Quantum numbers: up-low ν(MHz) E_u(K) A_{ul} (s^{−1}) Sij gu W (K km s^{−1}) 1 22 4 19 0 21 4 18 1 218371.495 132.7 1.881E-04 145 405 3.07(3.00) 2 22 15 7 0 21 15 6 1 218379.983 234.8 1.355E-04 81.4 315 2.21(0.17) 2 22 15 8 0 21 15 7 1 218379.983 234.8 1.355E-04 105 405 3 22 13 9 0 21 13 8 1 218574.680 207.3 1.652E-04 98.9 315 8.35(2.65) Unidentified line? 3 22 13 10 0 21 13 9 1 218574.680 207.3 1.651E-04 127 405 4 22 11 12 0 21 11 11 1 218872.112 183.8 1.911E-04 147 405 3.90(0.15) 4 22 11 11 0 21 11 10 1 218872.112 183.8 1.911E-04 114 315 5 22 10 13 0 21 10 12 1 219089.720 173.5 2.027E-04 155 405 5.06(0.49) Blended with CH_3OCHO 5 22 10 12 0 21 10 11 1 219089.727 173.5 2.027E-04 121 315 6 26 11 16 1 26 10 16 0 219384.910 232.5 5.221E-06 71.4 371 4.03 (0.05) Well below the fit! 6 22 9 14 0 21 9 13 1 219385.177 164.3 2.136E-04 163 405 6 26 11 15 1 26 10 17 0 219385.324 232.5 5.222E-06 91.7 477 6 22 9 13 0 21 9 12 1 219385.425 164.3 2.136E-04 127 315 7 22 1 21 1 21 1 20 0 219580.671 122.2 2.568E-04 195 405 12.63(0.56) Blended with CH_3OCHO 9 20 4 16 1 19 4 15 0 219764.925 114.4 2.453E-04 169 369 9.50(0.60) Blended with CH_3OCHO 9 21 4 18 1 20 4 17 0 221007.823 122.6 2.657E-04 189 387 5.67(0.28) 10 22 6 17 0 21 6 16 1 221038.799 142.6 2.395E-04 178 405 3.77(0.42) 11 22 5 18 0 21 5 17 1 221100.315 137.4 2.368E-04 176 405 3.39(0.26) 12 23 3 21 0 22 3 20 1 221338.974 138.4 2.717E-04 164 329 7.19(0.075)^∗ Blended with CH_3CN ν_8=1 1Same notation as Table A.5.

∗In Fig. 2, we have subtracted the CH_3CN ν_8=1 contribution that accounts for ∼50% of the flux