arXiv:1405.6198v3 [astro-ph.IM] 30 Sep 2014

PASJ: Publ. Astron. Soc. Japan , 1–??, © 2017. Astronomical Society of Japan.

FIELD: Automated emission-line detection software for Subaru/FMOS near-infrared spectroscopy

Motonari TONEGAWA,^1 Tomonori TOTANI,^1 Fumihide IWAMURO,^2 Masayuki AKIYAMA,^3 Gavin DALTON,^{4,5} Karl GLAZEBROOK,^6 Kouji OHTA,^2 Hiroyuki OKADA,^1 and Kiyoto YABE^7 1Department of Astronomy, Faculty of Science, The University of Tokyo, 7-3-1 Hongo, Bunkyo-ku, Tokyo 113-0033 tonegawa@astron.s.u-tokyo.ac.jp 2Department of Astronomy, Faculty of Science, Kyoto University, Sakyo-ku, Kyoto 606-8502 3Astronomical Institute, Faculty of Science, Tohoku University, 6-3 Aramaki, Aoba-ku, Sendai, Miyagi 980-8578 4Department of Physics, University of Oxford, Keble Road, Oxford, OX1 3RH, UK 5STFC RALSpace, Harwell Oxford, OX11 0QX, UK 6Centre for Astrophysics & Supercomputing, Swinburne University of Technology, P.O. Box 218, Hawthorn, VIC 3122, Australia 7National Astronomical Observatory of Japan, 2-21-1 Osawa, Mitaka, Tokyo 181-8588

(Received 2013 May 30; accepted 2014 September 28)

Abstract

We describe the development of automated emission line detection software for the Fiber Multi-Object Spectrograph (FMOS), which is a near-infrared spectrograph fed by 400 fibers from the 0.2 deg^2 prime focus field of view of the Subaru Telescope. The software, FIELD (FMOS software for Image-based Emission Line Detection), is developed and tested mainly for the FastSound survey, which is targeting Hα emitting galaxies at z ∼ 1.3 to measure the redshift space distortion as a test of general relativity beyond z ∼ 1. The basic algorithm is to calculate the line signal-to-noise ratio (S/N) along the wavelength direction, given by a 2-D convolution of the spectral image and a detection kernel representing a typical emission line profile. A unique feature of FMOS is its use of OH airglow suppression masks, requiring the use of flat-field images to suppress noise around the mask regions. Bad pixels on the detectors and pixels affected by cosmic-rays are efficiently removed by using the information obtained from the FMOS analysis pipeline. We limit the range of acceptable line-shape parameters for the detected candidates to further improve the reliability of line detection. The final performance of line detection is tested using a subset of the FastSound data; the false detection rate of spurious objects is examined by using inverted frames obtained by exchanging object and sky frames. The false detection rate is < 1% at S/N > 5, allowing an efficient and objective emission line search for FMOS data at the line flux level of >∼ 1.0 × 10^{−16}[erg/cm^2/s].

Key words: methods: data analysis — cosmology: observations — instrumentations: spectrographs

1. Introduction

FMOS (the Fiber Multi-Object Spectrograph) is a nearinfrared (NIR) fiber-fed spectrograph for the Subaru Telescope, which is capable of collecting nearly 400 spectra in a 0.2 deg^2 field-of-view (Kimura et al. 2010) available at the prime-focus of the telescope. The 400 fibers are divided into two groups of 200 fibers and connected to the two spectrographs, IRS1 (Infra- Red Spectrograph) and IRS2, for spectroscopy. A feature of FMOS is the suppression of bright OH-airglow emission lines using OH mask mirrors, which reduce the OH-airglow emission lines by more than 90% (Iwamuro et al. 2001). Since these airglow lines are the largest noise source in the NIR region, the OH suppression allows FMOS to perform NIR spectroscopic observations with a substantially reduced background level.

NIR spectroscopy is a useful probe for a variety of topics in astronomy. The detection of emission lines (e.g., Hα λ6563, [NII] λλ6548, 6483, [OIII] λλ4959, 5007)) in galaxies provide us with information on diverse galaxy properties including the redshift, star formation rate, metallicity and ionisation state.

A cosmological redshift survey, FastSound^1, is ongoing, using FMOS to measure ∼ 4,000 redshifts of star-forming galaxies at z ∼ 1.3 from Hα lines over a total area of ∼ 30 deg^2 (Tonegawa et al. 2014). The main science goal is the measurement of redshift space distortion (RSD) for the first time in this redshift range, to measure the structure growth rate as a test of general relativity on cosmological scales (see, e.g., Hawkins et al. 2003; Guzzo et al. 2008; Blake et al. 2011a; Samushia et al. 2012; Reid et al. 2012; Beutler et al. 2012; de la Torre et al. 2013 for recent galaxy redshift surveys whose scientific targets include RSD).

A key for studies treating many emission line galaxies in a large data set is to automatically search and detect emission lines. In the case of FMOS, residual OH airglow lines just outside the OH mask regions and cosmic rays often show spectral shapes similar to those of real emission lines. If such spurious line detections are included into a statistical sample of emission lines, they will cause a systematic error in, e.g., measurements of galaxy clustering power spectra. Therefore, an efficient automatic line detection software with minimized probability of false detection is highly desirable.

1 http://www.kusastro.kyoto-u.ac.jp/Fastsound/

In this paper, we present the development of an emission line detection software for FMOS spectroscopy, FIELD (FMOS software for Image-based Emission Line Detection). Twodimensional spectral images for each fiber are used in this algorithm in order to detect faint emission line features, while efficiently filtering out unwanted spurious detections. We examine the performance of this routine by applying it to a part of the FastSound project data. We test various parameters about shapes of emission lines in the 2D spectral images, to cut spurious objects efficiently. The contamination fraction of spurious objects is estimated by inverted 2D spectral images, which are obtained by exchanging object frames and sky frames.

In Section 2, we describe the data used in this work. In Section 3, we present the algorithm for detecting emission line candidates and describe key features that effectively reduce false detections caused by residual OH emission lines and cosmic rays. The results are presented in Section 4 and we summarize this work in Section 5.

2. The Sample

2.1. FMOS Observation

The targets for FMOS spectroscopy were selected using photometric redshift and Hα flux estimates using u^′g^′r^′i^′z^′ data of Canada-France-Hawaii Telescope Legacy Survey (CFHTLS) Wide (Gwyn 2012; Tonegawa et al. 2014). Observations are done with the normal-beam-switch (NBS) mode of FMOS, in which the object frame is taken using nearly all 400 fibers for targets, followed by an offset-sky frame with the same fiber configuration. In FastSound, the exposure time for one frame is 900 s, and two frames (i.e., total exposure of 30 min) are taken both for the object and sky frames. We use the high-resolution (HR) mode with spectral resolution of R ∼ 2200 and the wavelength range of 1.44–1.66 μm. The detector size is 2k×2k, and the pixel scale is 1.1 [Å/pix].

The primary FMOS data set used in this paper are eight FMOS field-of-views (FoVs) observed during March 28–29 and April 1–2 of 2012, as part of the FastSound Project. The FastSound field IDs are W2 041, 062, and 063 from the CFHTLS W2 field, and W3 162, 163, 164, 177, and 192 from W3. (See a forthcoming FastSound paper Tonegawa et al., in prep. for details of the FastSound observations.) FMOS fibers were allocated to 2, 871 galaxies in the eight FMOS FoVs and the emission line detection rate is typically ∼ 10% as reported in Tonegawa et al. (2014). The mean seeing is ∼ 0.8^{′′} in the R band. These eight FoVs are representative of FastSound data in normal observing conditions.

In rare cases (four out of 119 FoVs in the FastSound project), images taken by IRS2 spectrograph just after sunset show unusual dark patterns on the edge of detector, likely because of the instability of detector resulting from overexposures by dome-flat lamp or twilight. These patterns usually appear vertically in the left end (1.44–1.45 μm) of the image, but sometimes appear horizontally in the top or bottom end. Though the fraction of such data is not large in the total FastSound data set, line detection must be affected in these regions. Hence we also examine the performance of our software in these four FoVs in these bad conditions. These are W2 042 (taken in 2013 Feb.), W3 173 (2012 Apr.), W3 206 and 221 (2012 Jun.).

2.2. Basic Data Reduction

The FMOS two-dimensional raw data are reduced with the standard data reduction pipeline, FIBRE-pac (Iwamuro et al, 2012). In FMOS images, the x-axis is used for the wavelength direction, and 9 pixels are assigned in the y-axis direction for each fiber. The profile in the y-axis is just the point spread function (PSF) of light from a fiber. First, sky subtraction is performed for each frame. In order to trace the time-variance of sky background, the linear combination of two sky frames is used for the subtraction. After sky subtraction, the bias difference between the four detector quadrants, cross talk, bad pixels, distortions, and residual OH lines are corrected. The two images are then combined into the total exposure. The wavelength calibration is applied by making a correlation between x-axis and physical wavelength using images of a Th-Ar lamp. FIBRE-pac creates not only a science frame from object and sky images, but also square-noise and bad pixel maps for each FoV (Figure 1).

The square-noise map gives the square of noise level of each pixel, which is measured using 200 pixels around each pixel along the y-axis with a 3σ clipping algorithm iterated ten times. The bad pixel map indicates the quality of each pixel by a value between between 0 (bad) and 1 (normal). Those pixels on the detector flagged as non-functioning by FIBRE-pac and temporally prominent pixels appearing in one exposure (by cosmic ray events in most cases) are rejected and replaced in the science frames, by an interpolated value from surrounding pixels (Iwamuro et al. 2012). These pixels are stored as a bad pixel map for each exposure of 15 min. Our exposure time is 30 min, and hence we have two bad pixel maps for each field-of-view. When these two maps are combined, true defects of the detector are presented as the value 0 on the bad pixel map because they appear in both of two bad pixel maps, while cosmic rays have a value of 0.5 because they affect only one of the two science sub-frames. The information from the square-noise and bad pixel maps are utilized in the line detection algorithm presented below.

As well as the normal science frame, we also create an “inverted” science frame by exchanging object and sky frame in the FIBRE-pac procedures. The line detection algorithm is also applied to this inverted science frame. Any candidates detected in this inverted frames will not be genuine features, because real emission lines are negative in the frame and absorption lines are usually below the detection limit of FMOS for galaxies beyond z ∼ 1. Therefore we can reduce the overall false detection rate by tuning the software to minimize the detection rate in the inverted frames.

3. The Line Detection Algorithm

Our goal is to automatically detect spectral features corresponding to emission lines from the FMOS data with high reliability. To achieve this, we develop an emission line detection algorithm which is based on a convolution of the FMOS 2-D spectral images weighted by a detection kernel that is similar to the typical emission line profile (see, e.g., Gilbank et al. 2010 for similar approaches). Note that we do not use the fluxcalibrated 1-D spectra for emission line detection because they

Fig. 1. (Top) A square-noise level map drawn from an IRS2 image of FMOS. White regions represent higher noise level. Vertical high noise patterns trace the residual OH airglow emission lines. (Bottom) A bad pixel map drawn from an IRS2 image of FMOS. White, orange, and black pixels represent the map values of 1 (normal pixels), 0.5 (mostly cosmic ray events), and 0 (registered bad pixels), respectively. The curved feature in the top right quadrant is a scratch on the detector of the IRS2 spectrograph.

do not retain the 2-D shape of the PSF, which is useful to filter out false detections. The algorithm uses a flat-field image, square-noise map and bad pixel map as well as the science frame (see §2). The science frame and square-noise map are both convolved with the kernel, producing an effective signalto-noise (S/N) ratio of a line centered at each pixel along the wavelength direction. The flat-field image and bad pixel map are used to remove the OH mask regions or bad pixels from the calculation of S/N, so that the false detection rate is minimized.

3.1. Image Processing Before Line Search

An important feature of the FMOS spectra in the NIR is the hardware suppression of the the OH airglow. Inclusion of the masked regions does not improve the line detection efficiency, and the noise level is often particularly high at the border of OH masks, which would have a negative effect for efficient line detection. To remove such regions, we utilize the dome-flat image. The dome-flat image is divided by the detector-flat image to correct for different quantum efficiency between pixels (Iwamuro et al. 2012). After normalization, the flat-field image have values of ∼ 1 at normal pixels, while ∼ 0 at OH mask regions. We then make a new square-noise map by dividing the original square-noise map by this flat image. This operation increases the noise level inside and around OH mask regions by a large factor, making such regions ineffective in the line S/N calculation (see the next subsection). This approach is better than, e.g., simply removing OH mask regions by wavelength information, because the detailed performance of the OH mask depends on the temperature of FMOS instrument that changes with time. However, the effect of noisy regions around the border of OH masks cannot be completely removed by this operation, and hence we further remove the pixels whose original noise level (before dividing by the flat image) is higher than the mean by more than 2σ, from the line S/N calculation.

In order to decrease the chance of detecting cosmic rays and detector defects, we use of the bad pixel map (Figure 1). Since the bad pixel map has values of ∼ 1 at good pixels, ∼ 0 at defects, and ∼ 0.5 at pixels hit by cosmic rays, we exclude the pixels having values lower than 0.7 in the bad pixel map from the line S/N calculations.

Finally, the continuum component of galaxies may affect the detection efficiency of emission lines. Therefore the continuum component of each spectrum in the object frame was subtracted by applying fit1d task of IRAF with a 5th-order Chebyshev polynomial along the wavelength direction. This procedure was adopted separately for each pixel along the vertical direction perpendicular to wavelength.

3.2. Candidate Selection by Line Signal-to-Noise

We define the detection kernel by a two-dimensional Gaussian that imitates the typical shape of an emission line: g(x,y) ≡ exp [ − 1 2 ( x^2 σ^2_x + y^2 σ^2_y )] (1) where σ_x and σ_y are the typical dispersion of emission lines along x-axis (corresponding to wavelength) and y-axis (corresponding to the fiber aperture) on the detector. Although σ_x and σ_y are adjustable, we fix σ_x = 4.26 [pix] as the quadratic sum of the spectral resolution of FMOS (6.375 Å FWHM at λ = 1.53 μm in the HR mode) and the typical velocity dispersion of galaxies (175 km/s FWHM), and σ_y = 2.5 [pix] as representative of the FMOS fiber profile on the detector. Because FMOS is a fiber-fed spectrograph, σ_y is just an instrumetal spread of light from fibers without spatial information of target objects.

For each pixel (x_c,y_c), we define the signal S of a supposed line centered at the pixel as: S(x_c,y_c) = α ∑ (x_i,y_i)∈D g(x_i − x_c,y_i − y_c), (2) which is an integration over pixels (x_i,y_i) around (x_c,y_c) confined within the region D. This region is an ellipse whose center is (x_c, y_c) and the radii along the major and minor axis are 2σ_x = 8.52 [pix] and 2σ_y = 5.0 [pix]. The parameter α is the best-fit flux normalization of this kernel to the observed count c_i in the pixels in D: α = ∑ (x_i,y_i)∈D ci g(x_i −x_c,y_i−y_c) n^2_i ∑ (x_i,y_i)∈D g(x_i −x_c,y_i−y_c)^2 n^2_i

, (3)

which can be derived by minimizing χ^2, where

χ^2 ≡ ∑ (x_i,y_i)∈D [c_i − αg(x_i − x_c,y_i − y_c)]^2 n^2_i

, (4)

where n_i is 1σ noise at i-th pixel from the noise-square (n^2_i ) map. From the expression for α, it can be understood that the signal S (Equation 2) is a convolution of the count c_i with the detection kernel, weighted by 1/n^2_i . We then define the noise N for the line; since S is a linear combination of c_i whose noise is n_i, its statistical error can be calculated as: N(x_c,y_c) = ∑ (x_i,y_i)∈D g(xi − xc,yi − yc) √∑ (x_i,y_i)∈D g(x_i−x_c,y_i−y_c)^2 n^2_i

. (5)

Then the signal-to-noise ratio S/N is simply calculated from S and N.

The S/N is calculated along the wavelength direction, with y_c fixed at the central pixel (y_c = 0) among the 9 pixels for one fiber. When a certain pixel has a local peak of S/N map, the pixel is likely to be the center of an emission line feature. Therefore, we select emission line candidates by extracting pixels with S/N values higher than a threshold and locally greatest within the range of ±30 pixels from x_c along the wavelength direction. The latter condition is introduced to avoid multiple detections of the same line-like feature. Although the use of ±30 pixels as the minimum separation is a simplistic approach, it suffices for FastSound, because the closest lines (Hα λ6563 and [NII] λλ6548, 6483) at z ∼ 1.3 are separeted by >∼ 40 [pix] on the image. More sophisticated methods to discriminate multiple lines, such as connected-pixel approach, will be examined in future work. The selection threshold can be changed by the user: if one increases the threshold, the number of false detections decreases but the number of real lines would also be reduced. The false detection rate and its dependence on the threshold are discussed in §4.

3.3. Further Selection by Image Shape Parameters

The image shape of each candidate line includes important information that allows discrimination between real and false lines. We measure the following shape parameters: (1) center along y-axis: y = ∑ (x_i,y_i)∈D y_ic_i / ∑ (x_i,y_i)∈D c_i. (6)

(2) dispersion along y-axis:

σ_y^2 = ∑ (x_i,y_i)∈D (y_i − y)^2c_i / ∑ (x_i,y_i)∈D c_i. (7)

(3) fraction of positive pixels:

f_p = ∑ (x_i,y_i)∈D H(c_i) / ∑ (x_i,y_i)∈D 1 , (8)

where H(x) is a step function (1 for x > 0 and 0 otherwise). (4) position angle of the major axis of an elliptical fit: θ = 1 2 arctan ( 2 xy x^2 − y^2 ) (9) (5) axis ratio of the elliptical fit: b a = x^2+y^2 2 − √( x^2−y^2 2 )_2 + xy^2

x^2+y^2 2 + √( x^2−y^2 2 )_2 + xy^2

(10)

where a and b are semi-major and minor axes, respectively. (6) signal-to-noise fluctuation per pixel:

σ_{SNR} = ⟨ c^2_i n^2_i ⟩ − ⟨ c_i n_i ⟩_2

, (11)

where angle brackets denote the mean over the region D.

We applied our algorithm to an “inverted” science frame, obtained by running the FMOS image reduction pipeline with the object and sky frames exchanged, as well as the “normal” science frame. All the candidates in the inverted frames must be spurious, and their statistical nature should be the same as the spurious features in the normal frames, because the analysis procedures are exactly the same except for swapping the object/sky frames. For example, residual OH emission lines in the science frame can be positive or negative at the same probability depending on the observing conditions, and cosmic rays fall randomly both on the object and sky frames. Note that an emission line galaxy can accidentally fall in a fiber during the sky exposures, but we did not take these cases into account, because the possibility should be small.

Figure 2 shows the distribution of the shape parameters defined above, as a function of S/N, both for the normal and inverted frames.

It is found that in some regions (especially for the data in the 4 FoVs at the bad condition in the plots of σ^2_y , θ, b/a, and σ_{SNR} plots) the number of inverted-frame objects is relatively large compared with the normal-frame objects, and the numbers in normal/inverted frames are similar. False lines are expected to be dominant over real lines in such regions, and hence we

Table 1. Detected line candidate statistics for the eight FoVs under normal condition.^*

Obj.-Sky (1) Sky-Obj. (2) Contamination (2)/(1) S/N > 5.0 325 1 0.3% S/N > 4.5 381 7 1.8% S/N > 4.0 480 25 5.2%

*Statistics for both the normal and inverted images are presented. The contamination rate is estimated from the statistics of the inverted images.

introduced an event cut as shown by the solid curves in the figure. These conditions are expressed as:

σ_y > 4.210 + 6.868 ( S N )_{−1} + 36.413 ( S N )_{−2} (12)

|θ [deg]| > 15.00 + 94.79 ( S N )_{−1} + 26.30 ( S N )_{−2} (13)

σ_{SNR} > 7.701 × 10^{−3} + 3.609 × 10^{−3} ( S N )_{−1}

+0.5416 ( S N )_{−2} . (14)

It should be noted that the region of many inverted-frame objects is also found in the plot of minor/major axis ratio. We did not include a condition on this quantity, because we found that almost all of the false objects in this region are effectively removed by the other three conditions. We also examined the spectral images of the rejected events by eye, and confirmed that false detections do indeed dominate. These events mainly arise from unusual dark patterns appearing in the badcondition four FoVs, when the detector was in an unstable state. Examples of emission line candidates detected by the software are shown in Figure 3.

4. Performance

In Table 1, the number of emission line candidates in the eight FoVs under normal condition is shown for three different thresholds of S/N, both for the normal and inverted frames. There is only one false-detection in the inverted frame above S/N = 5.0, indicating that the false detection rate should be less than 1% at S/N > 5. We inspected the seven detections in the inverted frame at S/N > 4.5 by eye, and found that five were close to OH mask region, one at the edge of the detector, and the other one due to a cluster of hot pixels that shows a collective instability because of high dark current. Although the line detection algorithm suppresses the contribution to S/N from the OH mask region, strong residual OH emission often remains because of unstable OH airglow in the NIR, resulting in a small fraction of false detections. Since the events at the border of OH masks are the major source of the false detections, more strict cuts in such regions may further improve the fraction of real lines.

The cumulative S/N distribution of emission line candidates are displayed in Figure 4. The lower limit to the number of real emission lines can be estimated from the difference between the normal and inverted frames, i.e., red and blue lines. (They are lower limits because the line detection completeness is not

Fig. 6. The detection completeness as a function of input object brightness (in terms of S/N computed with the noise level) for the three different values of the detection threshold S/N indicated in the figure.

100% by statistical fluctuation and OH mask effects. See the next paragraph.) One can see that the number of detections sharply increases with decreasing S/N under S/N = 4.0, but this is mainly due to the increase of false detections in the inverted frame. The wavelength of the detected lines are plotted against S/N in Figure 5. Again, we see a tendency for detections in the inverted images to be close to the OH mask regions, indicating that residuals from the OH airglow is one of the major reasons for false detections.

The completeness of detection, i.e., the probability of successful detection for a given real emission line is also an important statistic to evaluate the performance of the software. To estimate this we ran a simulation by placing artificial objects and then applying our detection algorithm. The completeness against input brightness (S/N) is displayed in Figure 6, for some different values of detection S/N thresholds. The completeness does not reach 100% but stays lower than 90% at large input S/N, and this can be explained by the effect of OH masks that cover about 20% of the observed wavelength range. Indeed, we confirmed that the completeness becomes close to 100% when we carried out the same simulation excluding the OH mask regions. The completeness is about 40% for the input S/N same as the adopted S/N threshold, which is a reasonable result expected from statistical fluctuation and the OH mask effect.

It should be noted that we assumed the same Gaussian PSF as the kernel described in §3.2 for the artificial objects distributed in the simulation. Though the kernel is set to be similar to typical line profiles, the completeness for real emission galaxies is expected to be lower than this. A quantitative estimate of the completeness including this effect would be model dependent about the line profile distribution of a galaxy sample, which is beyond the scope of this work.

6 Astronomical Society of Japan [Vol. ,

Fig. 2. The six shape parameters as a function of S/N, for the normal (red circles) and inverted (blue triangles) frames. Filled symbols are used for line candidates in the eight FMOS FoVs taken in normal conditions and open symbols for the four FoVs taken in the bad condition (see §2). The solid curves show the parameter cuts adopted to remove false-detections. In the top-left panel, the zero-point of y is set at the midst of the nine pixels for each fiber.

Fig. 3. Examples of 2-D images of eight emission line candidates detected by the software. The white horizontal lines separate different fibers, and two neighboring fibers are also shown. The left four panels show those judged to be real by eye examination, in a range of S/N = 4.36–9.61. The right four panels are examples of false detections remaining even after the shape parameter cut. The causes of these false detections are indicated on the top of each panel. Vertical features appearing in some panels are residual OH lines, except for the bottom-right panel that shows the case of unusual dark pattern at the edge of the detector in the bad condition (see §2).

5. Conclusion

In this work we developed an automated emission line detection software for FMOS on the Subaru Telescope, using the data from the FastSound project, targeting Hα emission line galaxies at z ∼ 1.3. Emission line detection is based on S/N obtained by a convolution between the two-dimensional science frame and a line-profile kernel. A unique feature of the software for the FMOS data having many OH airglow suppression masks is the amplification of noise level (and consequent suppression in the S/N calculation) in the masked region by use of a flat-field image. Bad pixels on the detectors and pixels affected by cosmic-rays are removed from the S/N calculation. We also calculated six shape parameters for the detected lines, and these are used for further rejection of false detections. This is particularly useful to remove those spurious sources caused by unusual dark patterns when the detectors are in unstable condition.

The efficiency and reliability of the line detection were examined by applying the method to inverted science frames obtained by exchanging the object and sky images in the reduction process. The false-detection rate is 0.3, 1.8 and 5.2% for S/N above 5.0, 4.5, and 4.0, respectively. The emission line flux corresponding to S/N = 5 is about ∼ 1.0 × 10^{−16} [erg/cm^2/s] in normal condition. The software is open to the community, and currently available on request to the authors.

This work was supported in part by JSPS KAKENHI Grant Number 23684007.

References

Blake, C., et al. 2011, MNRAS, 415, 2876 Beutler, F., et al. 2012, MNRAS, 423, 3430 de la Torre, S., Guzzo, L., Peacock, J. A., et al. 2013, A&A, 557, A54

8 Astronomical Society of Japan [Vol. ,

Fig. 4. The cumulative counts of emission line candidates above a given value of S/N detected in the eight FoVs of normal condition (left) and the four FoVs of bad condition (right). The red line shows the number of candidates detected in normal frames, and the blue line shows those in inverted frames. The number of real emission lines can be estimated by the difference between the two.

Fig. 5. The distribution of central wavelengths of the emission line candidates. The same symbols are used as Fig. 2. Gray vertical stripes indicate the regions masked by the OH-airglow suppression mask.

No. ] Automated emission-line detection software for Subaru/FMOS 9

Guzzo, L., et al. 2008, Nature, 451, 541 Gilbank, D. G., Baldry, I. K., Balogh, M. L., Glazebrook, K., &

Bower, R. G. 2010, MNRAS, 405, 2594 Gwyn, S. D. J 2012, A&A, 143, 38 Hawkins, E., et al. 2003, MNRAS, 346, 78 Iwamuro, F., Motohara, K., Maihara, T., Hata, R., & Harashima, T.

2001, PASJ, 53, 355 Iwamuro, F., et al. 2012, PASJ, 64, 59 Kimura, M., Maihara, T., Iwamuro, F., et al. 2010, PASJ, 62, 1135 Reid, B. A., et al. 2012, MNRAS, 426, 2719 Samushia, L, Percival, W. J & Raccanelli, A 2013, MNRAS, 420,

2102 Tonegawa, M., Totani, T., Akiyama, M., et al. 2014, PASJ, 66, 43