arXiv:1407.4391v1 [astro-ph.GA] 16 Jul 2014

Panchromatic Hubble Andromeda Treasury IX: A Photometric Survey of Planetary Nebulae in M31

Mark J. Veyette^{1,2}, Benjamin F. Williams^1, Julianne J. Dalcanton^1, Bruce Balick^1, Nelson Caldwell^3, Morgan Fouesneau^{1,4}, Léo Girardi^5, Karl D. Gordon^{6,7}, Jason Kalirai^{6,8}, Philip Rosenfield^9, Anil C. Seth^{10}

ABSTRACT

We search Hubble Space Telescope (HST) Advanced Camera for Surveys (ACS) and Wide Field Camera 3 (WFC3) broadband imaging data from the Panchromatic Hubble Andromeda Treasury (PHAT) survey to identify detections of cataloged planetary nebulae (PNe). Of the 711 PNe currently in the literature within the PHAT footprint, we find 467 detected in the broadband. For these 467 we are able to refine their astrometric accuracy from ∼0.^{′′}3 to 0.^{′′}05. Using the resolution of HST, we are able to show that 152 objects currently in the catalogs are definitively not PNe, and we show that 32 objects thought to be extended in ground-based images are actually point-like and therefore good PN candidates. We also find one PN candidate that is marginally resolved. If this is a PN, it is up to 0.7 pc in diameter. With our new photometric data, we develop a method of measuring the level of excitation in individual PNe by comparing broadband and narrowband imaging and describe the effects of excitation on a PN’s photometric signature. Using the photometric properties of the known PNe in the PHAT catalogs, we search for more PN, but do not find any new candidates, suggesting that ground-based emission-line surveys are complete in the PHAT footprint to F 475W ≃ 24.

Subject headings: galaxies: individual (M31) — planetary nebulae: general

1Department of Astronomy, University of Washington, Box 351580, Seattle, WA 98195, USA

2Astronomy Department, Boston University, 725 Commonwealth Ave, Boston, MA, 02215, USA

3Harvard-Smithsonian Center for Astrophysics, 60 Garden Street Cambridge, MA 02138, USA

4Max-Planck-Institut fur Astronomie, Königstuhl 17, 69117 Heidelberg, Germany

5Osservatorio Astronomico di Padova – INAF, Vicolo dell’Osservatorio 5, I-35122 Padova, Italy

6Space Telescope Science Institute, 3700 San Martin Drive, Baltimore, MD, 21218, USA

7Sterrenkundig Observatorium, Universiteit Gent, Gent, Belgium

8Center for Astrophysical Sciences, Johns Hopkins University, Baltimore MD 21218

9Department of Physics and Astronomy G. Galilei, University of Padova, Vicolo dell’Osservatorio 3, I-35122 Padova, Italy

10Department of Physics & Astronomy, University of Utah, Salt Lake City, UT 84112

– 2 –

1. Introduction

As the nearest large spiral galaxy, M31 offers a unique opportunity to study planetary nebulae (PNe) on a galactic scale. Stars born with masses between 0.8-8 M_⊙ will likely go through a planetary nebula phase, making PNe good tracers of old stellar populations. Due to the short time scales between the AGB and PN phases, the distribution and kinematics of PNe are expected to be identical to their parent population. Studying PNe as a population provides insight into galactic structure and evolution. Understanding their evolution individually can provide insight into PN structure, formation, and enrichment of the interstellar medium and provide constraints for future PN evolutionary models. Studying PNe has the additional benefit of ease of detection and classification due to their strong emission features and unique spectra. Further, the population of PNe in M31 all lie at the same distance, making it possible to directly relate the luminosity and emission of a large and diverse sample of PNe.

Previous surveys have identified and studied thousands of PNe throughout the disk and bulge of M31 (Ciardullo et al. 1989; Hurley-Keller et al. 2004; Halliday et al. 2006; Merrett et al. 2006). Recent spectroscopic studies have begun to dig deeper into their physical properties (Kwitter et al. 2012; Sanders et al. 2012). The largest survey of M31 PNe to date is a deep kinematic survey performed by Merrett et al. (2006) (hereafter M06) using the purpose-built Planetary Nebula Spectrograph (Douglas et al. 2002), which can simultaneously detect PNe and measure their radial velocities. M06 identified 3300 emission-line objects in M31, of which 2615 are likely to be PNe.

Single-purpose spectroscopic surveys are very useful for studying the properties of individual PNe, but can be time consuming and costly. In contrast, multi-purpose photometric surveys can offer substantial, albeit less detailed, information about previously discovered PNe without the need for additional observations and can even be used to identify previously undiscovered PNe (Kniazev et al. 2014). Broad spectral coverage allows one to probe large spans of the spectral energy distributions of PNe and can be used in concert with spectroscopic surveys to calibrate photometric data for the study of PN emission. Although this photometric information alone is not as detailed as spectroscopic data, it is sufficient to place broad constraints on the properties of the overall strength of the PN’s emission lines and underlying stellar continuum for much larger populations than are accessible spectroscopically.

PNe are typically identified by searching for objects with bright [O III] λ5007 lines. Traditional large area surveys use the difference of on- and off-band narrowband photometry to select PN candidates which are then followed up spectroscopically to exclude H II regions and Wolf-Rayet stars, which also emit strong [O III] lines. Ground based spectroscopy is limited to only the brightest PNe and restricted by atmospheric windows. For the M06 survey, spectroscopic follow up was replaced by cuts of extended objects and objects with low F_{5007}/F_{Hα} ratios measured from narrowband imaging from the Local Group Survey (LGS) (Massey et al. 2006). While this method provided a deeper and larger survey without the need for spectroscopic follow-up, it is also subject to more contamination. High resolution imaging provides a cleaner view of the sources of the [O III]

– 3 –

emission, improving rejection of non-PN sources, particularly extended H II regions which are the dominant contaminating object in PN surveys.

In Section 2 of this paper we describe how we identified PNe in the PHAT catalog by crossidentification with M06. In Section 3 we present the PHAT PNe Catalog and characterize basic UV, optical, and NIR photometric properties of PNe. We discuss our results in Section 4 and summarize them in Section 5.

2. Data Acquisition and Analysis

2.1. The Panchromatic Hubble Andromeda Treasury

The Panchromatic Hubble Andromeda Treasury (PHAT) is a Hubble Space Telescope (HST) multi cycle imaging survey covering roughly 1/3 of M31’s star forming disk out to 20 kpc (Dalcanton et al. 2012). Observations were made with HST using the Advanced Camera for Surveys (ACS) and Wide Field Camera 3 (WFC3) with six filters spanning the ultraviolet (WFC3/UVIS F275W and F336W), the optical (ACS/WFC F475W and F814W), and the near-infrared (WFC3/IR F110W and F160W). All data files are publicly available and described at http://archive.stsci.edu/prepds/phat/. For full details of the data acquisition and analysis, see Dalcanton et al. (2012).

Briefly, photometry was reduced using the DOLPHOT 1.2 (Dolphin 2000) software package which uses iterative point spread function (PSF)-fitting photometry on neighbor-subtracted images to fit the sky and PSF simultaneously. This process is done for each peak in a stack of images across different filters of the same camera. DOLPHOT aligns each image in a stack using hundreds to thousands of bright stars in the field to achieve the precise alignment needed for its photometric processing. Further internal astrometric alignment was performed for each camera. The cameras were then aligned with each other and with a global reference frame. The reference frame was provided by archival i^′ data from MegaCam CFHT. The error in ACS/WFC to CFHT alignment is 0.^{′′}05 and the relative error in alignment across the three cameras is 0.^{′′}01. Cross identification with M06 is therefore limited by the astrometric accuracy of M06 — reported to be 0.^{′′}34 and 0.^{′′}16 in RA and Dec respectively.

We avoided restricting our search to the PHAT point source catalogs. Rather, we cross identified PNe using the ACS “*.phot” files produced by DOLPHOT. We used these raw DOLPHOT output files which contain sources that may poorly fit the PSF so as not to exclude any extended PNe.

PHAT is a multi-release program that is still in progress. This paper covers only the PHAT data available at the time the work for this paper was done. PHAT consists of a total of 23 bricks, each containing 18 HST pointings. This paper covers only Bricks 2, 4, 5, 6, 8, 9, 12, 14, 15, 16, 17, 18, 19, 21, 22, and 23. Brick 1 was excluded from this paper, though currently available, due to heavy crowding effects that made it difficult to identify PNe in the inner regions of M31.

– 4 –

2.2. Identifying PNe in PHAT

All PNe analyzed in this paper were originally identified as part of the M06 deep kinematic survey of M31, which covered M31’s disk out to a radius of 2^∘ (27.4 kpc). M06 identified 2615 likely PNe down to a reported completeness of m5007 ≃ 23.75 for the [O III] λ5007 line. Of these 2615, 711 are in the current PHAT footprint. Individual PN candidates have reported uncertainties in their m5007 measurements of 0.07 mag and in their RA and Dec measurements of 0.^{′′}34 and 0.^{′′}16 respectively. We cross identified sources in the M06 catalog with photometric data from PHAT.

2.2.1. PNe in the PHAT filters

Figure 1 shows throughput curves for each of the PHAT filters overlaid on a model PN spectrum. The bandpasses of the two UV filters, F275W and F336W, overlie many weak emission lines together with a significant stellar and nebular continuum (see Bianchi et al. 1997). The majority of nebular emission line flux falls under the bandpass of the F475W filter, namely the strong emission lines: [O III] λ5007, [O III] λ4959, Hβ, and Hγ. Therefore, F475W flux is due largely to nebular emission lines. The F814W bandpass overlies a few weak emission lines, though the majority of flux in F814W is likely due to stellar and Paschen continuum. A few weak emission lines also fall under the F110W bandpass, which could have a significant or dominant contribution to the total flux given the weaker underlying stellar continuum in the NIR. Flux in F160W, however, is most likely entirely due to continuum from the central star as there are no emission lines that could have a significant contribution to the total F160W flux. Table 1 lists likely main contributors of PNe flux in each of the PHAT filters.

The vast majority of PN emission line flux within the PHAT spectral range falls in the F475W bandpass. Thus, most PNe have unusual colors, particularly in three-color images where F475W drives the green channel. Figure 2 shows F814W:F475W:F336W R:G:B images in which PNe appear anomalously blue-green, making them easy to visually differentiate from surrounding stars. We generated equivalent images for all the PHAT data and used them to visually identify PNe, as described in the following section.

2.2.2. PHAT Astrometry and Photometry

To assess the relative positional accuracy of the M06 and PHAT catalogs, we performed an initial visual search for anomalously blue-green objects within 3 times the 1σ uncertainties of the M06 reported positions. We found likely optical counterparts as far as 2^{′′} from their cataloged position. We therefore adopted 3^{′′} (11 pc at the distance of M31) as a search radius.

There are, on average, ∼600 objects in PHAT within 3^{′′} of an M06 PN location. We, therefore, require additional constraints to identify the PHAT counterpart. We first take advantage of the

– 5 –

fact that there is a strong linear relation between the quoted M06 m5007 magnitude and the PHAT F475W magnitude, since the majority of F475W flux is due to the [O III] λ5007 line. We show this relation in Figure 3 for the final catalog. A linear fit to this relation finds F 475W = −0.2240 + 1.0187 × m5007. In addition to magnitude, we also considered cross-identifying sources based on optical color, positional offset from M06, and the “sharpness” and “roundness” of the PSF. The most distinguishing identification parameters were optical color and the expected F475W magnitude estimated from the M06 m5007 magnitude. The round and sharp PSF values from PHAT’s photometry were used mainly to weed out artifacts and spurious objects such as cosmic rays from the uncut “*.phot” files.

To automatically select candidates on the basis of the above parameters, we used an initial training set of visually identified PNe. We calculated the average value and 1σ spread of each identification parameter (expected F475W, optical color, positional offset from M06, sharpness, and roundness). For each object in PHAT within 3^{′′} of an M06 PN location, the differences between the training set’s and the object’s parameter values were normalized by the 1σ spreads of the parameter values and then averaged over all parameters giving double the weight to the optical color and estimated F475W magnitude. The resulting value, noted as z_{P N} , is the object’s standard score of the deviation from typical PNe identified in PHAT. Objects with z_{P N} < 1 are highly probable PN candidates. Objects with z_{P N} < 1.5 are probable PN candidates. Objects with z_{P N} < 3 are possible PN candidates. Eqs. 1 and 2 define z_{P N} where, for parameter x, x_{obj} is the object’s value, x̄_{P N} is the training set’s average value, and σ_{xP N} is the 1σ spread.

z_x ≡ |x_{obj} − x̄_{P N} | σ_{xP N} (1) z_{P N} ≡(2z_{F 475W} + 2z_{color} + z_{RA} + z_{Dec} + z_{sharp} + z_{round})/8 (2) We attempted to identify new PNe in M31 using the optical color and F475W magnitude space occupied by the M06 PNe. We looked for [O III] emission in the LGS [O III] images (Massey et al. 2006) to confirm these candidate PNe. None of these candidates had measurable [O III] emission. Therefore, this attempt did not result in the identification of any new PNe, suggesting M06 is complete to the LGS [O III] detection limit. An earlier attempt to photometrically identify new PNe in PHAT was made by selecting sources in the bulge of M31 with F 475W < 24.0, F 475W − F 814W < −0.3, and no matching source in the literature. Spectroscopic follow-up of 16 of these candidates found that 7 showed emission lines indicative of PNe. A larger campaign could lead to the discovery of PNe in the inner regions of M31, where previous surveys suffered extreme crowding.

Finally, all catalogs and figures presented contain only photometric measurements with a signalto-noise ratio (SNR) greater than 4. This SNR cut, which is necessary to ensure only accurate, high-quality measurements are analyzed, resulted in the culling of 120 F275W measurements, 2 F336W measurements, 1 F814W measurement, and 29 F160W measurements.

– 6 –

2.2.3. Visual Assessment

To aid in the assessment of our automatic selection method, a visual catalog was created containing a PHAT 3-color image, PHAT optical CMD, LGS [O III] image, and LGS V-band image (Massey et al. 2006), for each M06 PN location that PHAT overlaps. The three objects with the lowest z_{P N} were marked in the PHAT image and CMD. A final PNe catalog was created using the one probable candidate in fields where there was only one probable candidate, and the bluest of the candidates with the three lowest z_{P N} in the cases where there were multiple probable candidates or no probable candidates. This final catalog of 467 PNe is presented in Section 3.

The visual catalog also allowed for the quick identification of possible misidentifications in the M06 catalog. Locations where there was no probable PN candidate in PHAT and resolved nebulosity in either the PHAT image or in the LGS [O III] image were marked as probable H II regions. Locations where there was no probable PN candidate in PHAT, no obvious nebulosity, clear V-band detection, and a single bright main sequence star present in the CMD with F475W much brighter than expected from m5007 were marked as possible stellar emission line sources, many of which may be Wolf-Rayet stars. Both H II regions and WR stars can have strong [O III] λ5007 lines, and could have been detected by M06 as [O III] emission objects. The left two panels of Figure 4 show PHAT images of likely M06 misidentifications - one marked as an H II region, the other as a stellar source. A catalog of these possible misidentifications is presented in Section 3. Of the 711 PNe in the M06 catalog that overlap the PHAT images, 152 were likely misidentified.

There were 92 cases where there were no possible PN candidates (z_{P N} < 3) and no obvious source of misidentification in the PHAT or LGS images. The frequency of these cases is much higher for fainter M06 PNe. For M06 PNe with m5007 > 25 mag, over half were found to have no PN candidate in PHAT and no source of misidentification. The right panel of Figure 4 shows a PHAT image of an M06 PN location with no PN candidate in PHAT. These cases are left out of all catalogs and figures. Figure 5 shows histograms of m5007 magnitude for different PHAT classifications.

3. Results

Figure 6 shows the spatial distribution of PNe in the PHAT footprint as well as the locations of possibly misidentified M06 sources. The density of PN sources falls of radially, tracing the old stellar population. Sources tagged as extended H II regions or other non-PN stellar sources are consistently found near regions of recent and on-going star formation along the disk characterized by high UV flux. Non-PN objects were selected without prior knowledge of their location.

Table 2 provides astrometric and photometric measurements in six filters ranging from near- IR to near-UV for 467 PNe in the footprint of the current PHAT release. Of the 467 PNe in the catalog, 291 have an F275W measurement, 409 have an F336W measurement, 467 have an F475W

– 7 –

measurement, 466 have an F814W measurement, 185 have an F110W measurement, and 156 have an F160W measurement.

Tables 3 & 4 list M06 PNe for which we found a possible source of misidentification. These non- PN objects are listed as either extended H II regions (Table 3) or non-PN stellar sources (Table 4). Astrometry and photometry for stellar sources are included when available. Of these non-PN sources, our classifications for 38 sources agree with spectroscopic classification from Sanders et al. (2012). Most of these are H II regions.

3.1. Planetary Nebula Luminosity Function

The Planetary Nebula Luminosity Function (PNLF) has been proposed as a standard candle for distance measurements (Ciardullo et al. 1989). The PNLF is described by

N(M5007) ∝ e^{0.307×M5007} [ 1 − e^{3(M5007∗−M5007)} ] , (3)

where M5007^∗ is the absolute magnitude bright-end cut-off. The same formula can be applied to apparent magnitude when the distances to the PNe are roughly equivalent, as is the case with M31.

The upper half of Figure 7 shows the PNLF of the PHAT PNe catalog using the M06 m5007. The PHAT m5007 PNLF matches the expected form up to ∼24th magnitude, consistent with the M06 reported completeness of 23.75. The apparent magnitude bright-end cut off of the PHAT m5007 PNLF is m5007^∗ = 20.20±0.03, which agrees well with the M06 value of m5007^∗ = 20.2±0.1 and the Ciardullo et al. (1989) value of m5007^∗ = 20.17.

The bottom half of Figure 7 shows the PHAT PNLF using F475W magnitudes in place of m5007. As one would expect given Figure 1, the PHAT F475W PNLF is similar in shape to the m5007 PNLF up to ∼24th magnitude. There is a slight offset in the apparent magnitude brightend cut-off between the m5007 and F475W PNLF and the fainter portion of the F475W PNLF appears flatter. Assuming the F475W PNLF is of the same form as the m5007 PNLF, the apparent magnitude bright-end cut-off of the PHAT F475W PNLF is F 475W^∗ = 20.69 ± 0.03. Assuming a distance modulus of (m − M)_0 = 24.47 ± 0.07 (corresponding to a distance of 785 ± 25 kpc) (McConnachie et al. 2005), the absolute magnitude bright-end cut off of the PHAT F475W PNLF is F 475W^∗ = −3.78 ± 0.08.

3.2. CMD Distributions of the PHAT PNe

We now describe the distribution of PNe in PHAT CMDs; in Section 4.3 we discuss the evolution of PNe through the CMDs.

– 8 –

3.2.1. Optical

An optical CMD of PNe compared with nearby stars (Figure 8) confirms previous expectations that most PNe exist in a very blue portion of the CMD where not many stars are expected to be found. In general, PNe are distinctly brighter and bluer than neighboring stars (<3^{′′}) as expected from their emission-line dominated spectrum; however, there is a population of PNe that overlap with main sequence stars in Figure 8. PNe exist in a distinct region of the optical CMD as outlined by the parallelogram in Figure 8, with hand-drawn boundaries −1.8 < F 475W − F 814W < 0.2 and 22 > F 814W < 27, containing 95% of our PNe sample.

3.2.2. UV

Over 87% of PNe in the PHAT catalog have detections in F336W and 62% have detections in

both UV filters. The left side of Figure 9 shows the locations on the optical CMD of PNe with and without UV detections. UV detection is much more common among PNe that are bright in F475W, as would be expected for flux due to stellar continuum with some contribution from emission lines. UV detection is also slightly more common among bluer PNe, as the brightest PNe also tend to be the bluest.

Figure 10 shows the UV CMD of the PNe with detections in both UV filters. PNe tend to be brighter and redder in the UV than other stars within 3^{′′}. However, these neighboring stars are dominated by MS stars and there is only a slight color difference between PNe and the population of hot MS stars, as would be expected from the assumption that UV flux of PNe comes from the very hot central star. The brightest PNe have well constrained colors, while the spread in color increases for fainter F275W magnitudes which tend to be the noisiest measurements in the PHAT filter set.

3.2.3. NIR

Over 33% of PNe in our catalog have detections in both NIR filters. Nearly all PNe with

detections in the NIR also have detection in F336W, 84% of which have detections in both UV

filters. Thus, any PN bright enough to be detected in the NIR is almost certainly also detected in the UV, where proportionally more of the PN’s bolometric flux is emitted. The right side of Figure 9 shows the locations on the optical CMD of PNe with and without NIR detections. Similar to the UV, NIR detection is much more common among PNe that are bright in F475W. However, the optical color distribution of PNe with detections in NIR is relatively flat and distinctly different from the optical color distribution of all PNe.

Figure 11 shows the NIR CMD of the PNe with detections in both NIR filters. PNe are

– 9 –

distinctly bluer and brighter in the NIR than stars around them, which are primarily cool RGB and AGB stars. Their distinct color in the NIR is due to the few emission lines in F110W and the lack of emission lines in F160W.

There are two NIR-bright PNe in the PHAT catalog with F 110W − F 160W > 1 that are separate from the rest of the PNe population. It is likely that the PN in each case is coincident with an NIR-bright source.

PNe are indeed unique in their photometric signal across all of PHAT’s six bands—particularly their optical and NIR color. However, their most distinguishing feature by far is a booming F475W signal best probed by F475W-F814W color. Like in F475W, emission lines in F110W add additional flux that give PNe distinct NIR colors. However, as seen in Figure 12, PNe are best secluded by their optical color. Any diagnostic that used multiple bands to identify PNe would necessarily have most of its weight on F475W, as this is where the ratio of line emission to stellar continuum is largest (see Section 4.4).

3.3. Excitation Classification

Since PNe are emission line objects, we assume the majority of F475W flux is from emission lines, allowing us to estimate line flux ratios from the difference between the F475W and m5007 magnitudes. As seen in Figure 1, the three strongest emission lines that fall under F475W are [O III] λ5007, [O III] λ4959, and Hβ. Because the [O III] λ5007 to [O III] λ4959 ratio is nearly constant for all PNe, differences in the m5007 − F 475W color of our PNe are largely due to differences in the [O III] to Hβ ratio. This ratio is a measure of ionization in the nebula and, in general, is expected to be large when the central star is very hot.

To explore the possibility of using F 475W − m5007 as a probe of the [O III]/Hβ emission line ratio, we used data from Sanders et al. (2012), who have published spectral line ratio measurements for several PNe in M31, 69 of which are in the PHAT catalog and have both Hβ and [O III] λ5007 measurements. Figure 13 shows the relation between F 475W − m5007 and the [O III] to Hβ ratio, F_{5007}/F_{Hβ} . The large spread of the relation is likely due to differences in the underlying stellar continuum which can significantly contribute to the total F475W flux when line emission is comparatively weak. However, a relation between the relative F 475W − m5007 and F_{5007}/F_{Hβ} exists. For low values of F_{5007}/F_{Hβ} (< 11), i.e. comparatively strong Hβ lines, the relation is quite strong, such that PNe with lower F_{5007}/F_{Hβ} values have brighter F475W magnitudes in relation to their m5007 magnitudes. At higher values of F_{5007}/F_{Hβ} , i.e. comparatively weak Hβ lines, the relation saturates as the contribution of Hβ to the total flux becomes indistinguishable from the continuum and weaker emission lines. Therefore, estimates of F_{5007}/F_{Hβ} can only be made for PNe with F 475W − m5007 < 0.2. Estimates of the F_{5007}/F_{Hβ} ratio can be made for 170 of the 467 PNe in the PHAT catalog using Equation 4.

F_{5007}/F_{Hβ} = 10^{0.7835+0.7003(F 475W −m5007)} (4)

– 10 –

The ratio F_{5007}/F_{Hβ} has been used to calculate the Excitation classification (EC) of low EC PNe (EC < 5) (Dopita & Meatheringham 1990; Reid & Parker 2010). We adopt the Ex_ρ method from Reid & Parker (2010) for calculating the EC of low EC PNE as defined in Equation 5.

EC ≡ 0.45 × (F_{5007}/F_{Hβ} ) (5)

EC estimates for the 170 PNe with F 475W − m5007 < 0.2 are included in Table 2 with an uncertainty of σ_{EC} = ±1. All PNe with F 475W − m5007 ≥ 0.2 are assumed to have EC > 3.8. As excitation increases, the contributions of other emission lines such as He II become comparable with Hβ which would cause an underestimate in the PN’s EC.

4. Discussion

4.1. Extinction

M31 is known to be a dusty galaxy (e.g. Draine et al. 2014, Dalcanton et al. 2014, submitted). Therefore, we need to understand how dust may be affecting our PNe photometry. To determine the degree to which the PNe sample is attenuated by extinction, we selected a subsample of PNe from “dust-free” regions as determined from the extinction maps of Dalcanton et al. 2014 (submitted). These PNe were selected to be in regions with A_V <0.5 and a low fraction of reddened stars. Their optical CMD is shown in Figure 14, and the distribution is qualitatively equivalent to that of the full sample. Perhaps because PNe tend not to be associated with ongoing star formation or because PNe are associated with old stars (> 1 Gyr) that have migrated out of the galactic plane, our PNe photometry appears to be relatively unaffected by dust extinction.

4.2. PNLF

The consistency of the PHAT m5007 PNLF with the M06 PNLF suggests that the PHAT PNe catalog is a representative and unbiased subset of the M06 catalog. Despite the fact that the F475W bandpass covers emission lines other than [O III] λ5007 and continuum from the central star, the PHAT F475W PNLF is similar in form to the m5007 PNLF, particularly on the bright-end – aside from a slight offset. This is because the contribution by stellar continuum and weaker emission lines to the total F475W flux is less significant in brighter PNe, for which the F475W magnitude is a good indicator of m5007, making the F475W PNLF a possible proxy for the traditional m5007 PNLF for future extragalactic surveys. The flatness of the faint-end of the PHAT F475W PNLF could be due to the larger relative contribution by stellar continuum for PNe with weaker [O III] emission.

– 11 –

4.3. Excitation Classification and PN Evolution

Excitation classification has been found to depend on the evolutionary state of a PN, which is reflected in the central star’s effective temperature, the PN’s radius, and the PN’s expansion velocity (Dopita et al. 1987, 1988; Dopita & Meatheringham 1990, 1991a,b; Gurzadyan & Egikian 1991; Reid & Parker 2010). Because many parameters affect the EC, the correlations between EC and physical properties of PNe have large scatter which, coupled with the large uncertainties of our own EC estimates, means we cannot reliably estimate individual parameters. However, our ability to isolate a subsample of low EC PNe allows us to place some PNe in the evolutionarily young phase with small sizes and low central star temperatures. For the remainder of this paper, we referred to PNe with EC below the upper limit of our ability to determine EC (EC < 3.8) as low EC PNe and all other PNe as medium to high EC PNe; note that the canonical definition of “low EC” includes up to an EC of 5. We do expect some cross contamination due to the large uncertainties in our F 475W − m5007 measurements such that some PNe in our sample of low EC PNe are in fact medium to high EC PNe and vice versa. In addition, some high EC PNe may be misclassified as low EC PNe due to increased contribution of He II and other weak lines in the F475W bandpass.

According to PN evolutionary tracks based on photoionization models described in Dopita & Meatheringham (1990) and Reid & Parker (2010), all PNe, regardless of their initial mass, begin as low EC PNe. They then increase in EC as they evolve to a mass-dependent maximum EC before returning to a slightly lower EC. Only lower mass PNe (central star stellar mass ≲0.6M_⊙) are expected to return to an EC lower than 5. The majority of low EC PNe in our catalog are therefore likely to be young, but with a wide range of initial masses. Additionally, high EC PNe in our catalog are expected to cover the entire range of PNe ages except for the youngest.

Another set of PN evolutionary models useful for understanding how PNe evolve through PHAT color-magnitude and color-color diagrams are 1D radiation-hydrodynamic models that describe the evolution of PNe by modeling a circumstellar envelope along with the central star as it evolves from the AGB toward the white-dwarf cooling path (Perinotto et al. 2004). Studies of the emission properties of these models (e.g. Schönberner et al. 2007; Méndez et al. 2008) explain that in early stages of evolution, PNe increase in m5007 brightness as they increase in EC until they reach a maximum m5007 brightness. The intensity and duration of maximum m5007 brightness is mass-dependent. In general, higher mass progenitors result in brighter maximum m5007 but for shorter duration than fainter low mass progenitors. (Kwok 2000). Maximum m5007 brightness is reached at ECs higher than the upper limit of our ability to determine EC of PNe in PHAT. Therefore, we expect the PNe in our catalog to evolve from low EC to high EC simultaneously increasing in m5007 brightness to a maximum brightness. Indeed, this is the qualitative behavior observed in Figure 15, as described below.

– 12 –

4.3.1. PN Evolution Through CMDs

Figure 15 shows the locations of low EC and medium to high EC PNe on an optical CMD. We see a bifurcation of low EC and medium to high EC PNe among PNe with F475W < 23.5. This behavior would be consistent with the evolutionary transition of a high mass progenitor along, or parallel to, Side 1 (the upper boundary in the figure) as the PN’s [O III] λ5007 flux reaches a maximum. The proposed transition aligns well with the PN evolutionary models described above, namely a transition from low EC to higher EC and from fainter F475W magnitudes to the brightest. Brightening in F475W along Side 1 toward the bluer portion of the CMD corresponds to evolution with a constant F814W magnitude.

The less distinct red boundary indicated by Side 2 in Figure 15 is made up of mostly low EC PNe and overlaps main sequence stars. The overlap with the main sequence is most likely due to interstellar reddening of young PNe but could also indicate residual contamination from WR stars. The faint boundary (Side 3) and the similar boundary for field stars are products of the cuts in signal-to-noise.

Figure 16 shows the locations of low EC and medium to high EC PNe on a UV CMD. The low EC PNe are systematically brighter and bluer, suggesting some transition toward redder and fainter UV magnitudes as they evolve into higher ECs. The slightly redder extant of the PN distribution compared to bright MS stars is likely due to increased contribution from nebular continuum in the F336W bandpass. Also shown in Figure 16 are two Post-AGB (P-AGB) evolutionary tracks from Vassiliadis & Wood (1993) converted to WFC3/UVIS photometry as described in Girardi et al. (2008), shown without extinction correction. We see an increased spread of UV color at fainter F275W magnitudes, but it is hard to say for certain if the spread represents the true spread in PNe UV color, or is due to photometric uncertainty and/or interstellar reddening. Still, it is clear that reduced UV flux is a prominent difference between low EC and medium to high EC PNe on the UV CMD. Such a transition is expected from P-AGB evolutionary tracks.

Figure 17 shows the CMD for F336W-F475W vs F336W. Because F336W is dominated by stellar and nebular continuum and F475W by line emission, this diagram compares emission line flux to underlying continuum. Low EC PNe appear much like hot stars, but medium to high EC PNe show up where few stars are expected to be found. The increased excitation increases flux in the emission line-dominated F475W bandpass, pulling PNe redward to a relatively unpopulated portion of the CMD. This diagnostic may be useful for future studies of PNe as it is possible to replicate through ground-based observations. Of the six PHAT filters, PNe are brightest in F336W and F475W.

In the NIR there is no separation in either color or magnitude between low EC and medium to high EC PNe. MS stars in PHAT are expected to have NIR colors redder than F 110W −F 160W = 0, with only younger MS stars (< 100 Myr) expected to have bluer colors at F 110W < ∼23. The lack of young MS stars neighboring PNe (Figure 11) emphasizes that PNe are not sampling regions with very recent star formation.

– 13 –

4.4. Spectral Energy Distributions

For PNe with detections in all six PHAT filters, converting from magnitude to total flux produces Spectral Energy Distributions (SEDs) covering 0.3 to 1.6 microns. Such SEDs will provide constraints for future models of PNe evolution. Such models will be necessary to reliably constrain extinction for these PNe. Figure 18 shows SEDs for 130 PNe with detections in all six filters.

The right column of Figure 18 shows SEDs grouped by m5007. SEDs of the brightest PNe are largely uniform while SEDs of fainter PNe show more variations. The SEDs look much like those of hot stars with the addition of a prominent peaks at 0.475 and 1.1 microns due to emission lines in the bandpasses. However, unlike hot stars, flux at 0.336 microns exceeds flux at 0.275 microns for many PNe. This could be due to the fact that 0.275 micron flux is more attenuated by extinction, combined with the larger uncertainties in 0.275 micron flux.

The left column of Figure 18 shows SEDs grouped by EC. At the lowest EC, the SEDs show little evidence of emission line flux above the blue stellar continuum. Moving through higher EC, the emission line features become much more prominent. Again, this suggests low EC PNe are largely young PNe with the lowest EC PNe being just beyond the emergence of [O III] lines, which grow stronger as PNe evolve to higher EC.

The two anomalously NIR-bright PNe also show up in the SEDs. Again, it is likely they are crowded by a NIR-bright source.

4.5. Resolved PNe and Size Estimates

PNe are commonly found to have radii on the order of 0.1 pc but have been known to have radii as large as 0.6 pc (Phillips 2003). It might be expected that PNe with radii >0.5 pc could be resolved in PHAT considering HST’s ACS camera has a plate scale of 0.^{′′}05/pixel (0.2 pc/pixel at the distance of M31) and the average full width at half max (FWHM) of PHAT’s PSF is ∼2 pixels. However, as PNe evolve they both expand radially and drop in luminosity, resulting in a steep decline of surface brightness. PNe large enough to be resolved in PHAT are likely too faint to be detected in PHAT. At intermediate stages of evolution, however, some PNe may be bright enough to be detected in PHAT and large enough to be slightly resolved. Figure 19 shows the dependence of FWHM on magnitude in PHAT data. Faint sources in crowded regions suffer heavy blending that can cause the direct FWHM measurement to overestimate the true FWHM. However, the FWHM distribution of PNe is indistinguishable from that of nearby stars, suggesting that PNe are not resolved in PHAT.

In general, the PNe sample does not appear any more extended than nearby stars, however, we found one PN (M06 143) that appeared significantly larger than the surrounding stars. We show an image of this PN in Figure 20. This PN has a FWHM of ∼4 pixels, compared to stars in the area, which have FWHMs of ∼2 pixels. After accounting for the effects of a 0.^{′′}1 FWHM point

– 14 –

spread function, the intrinsic radius of the PN would be up to 0.^{′′}08, or 0.3−0.4 pc. The PHAT magnitudes of M06 143 are likely underestimated due to the extended nature of the PSF. This is supported by the fact that M06 143 is the faintest PN in our sample, with F 475W = 26.15, and has F 475W − m5007 = 1.4 — the largest difference of the PNe sample and more than three times the F 475W − m5007 saturation limit of the PNe sample. Though the optical color of M06 143 is consistent with PNe in PHAT, we cannot rule out the possibility it is a blended source or a non-PN source.

Finally, any M06 source that was visually resolved in PHAT was rejected as being a PN (M06 143 is the only marginally extended PN) and classified as a possible H II region. Therefore, inclusion in Table 3 serves as an updated classification of extended objects in M06, which will be more reliable than such classifications from the ground-based data.

5. Summary

We have identified 467 PNe in the PHAT survey photometry catalogs. The F475W broadband magnitudes show a tight correlation with the m5007 magnitudes clearly indicating the purity of our sample. These PNe are unresolved and dominated by [O III] line emission. Since the PHAT astrometric solution is precise to 0.^{′′}01, we have provided improved astrometry for all of the PNe in our sample, along with 6-band photometry from the PHAT survey.

Comparing our broadband magnitudes and M06 narrowband magnitudes to excitation classifications from optical spectroscopy in the literature shows that low excitation PNe tend to have bluer colors in F475W-m5007, suggesting that our broadband magnitudes in these cases probe the emission from the central star. These results indicate that our SEDs will be useful for constraining models of PNe and central star evolution.

The size distribution of PNe in our HST images are consistent with that of point sources. However, there is some evidence that at least one PN is marginally resolved, corresponding to a physical radius of up to 0.3−0.4 pc.

Support for this work was provided by NASA through grant GO-12055 from the Space Telescope Science Institute, which is operated by the Association of Universities for Research in Astronomy, Incorporated, under NASA contract NAS5-26555.

REFERENCES

Bianchi, L., Vassiliadis, E., & Dopita, M. 1997, ApJ, 480, 290

Ciardullo, R., Jacoby, G. H., Ford, H. C., & Neill, J. D. 1989, ApJ, 339, 53

– 15 –

Dalcanton, J. J., Williams, B. F., Lang, D., et al. 2012, ApJS, 200, 18 Dolphin, A. E. 2000, PASP, 112, 1383 Dopita, M. A., Meatheringham, S. J., Wood, P. R., et al. 1987, ApJ, 315, L107 Dopita, M. A., Meatheringham, S. J., Webster, B. L., & Ford, H. C. 1988, ApJ, 327, 639 Dopita, M. A., & Meatheringham, S. J. 1990, ApJ, 357, 140 Dopita, M. A., & Meatheringham, S. J. 1991a, ApJ, 367, 115 Dopita, M. A., & Meatheringham, S. J. 1991b, ApJ, 377, 480 Douglas, N. G., Arnaboldi, M., Freeman, K. C., et al. 2002, PASP, 114, 1234 Draine, B. T., Aniano, G., Krause, O., et al. 2014, ApJ, 780, 172 Ferland, G. J., Porter, R. L., van Hoof, P. A. M., et al. 2013, RMxAA, 49, 137 Girardi, L., Dalcanton, J., Williams, B., et al. 2008, PASP, 120, 583 Gurzadyan, G. A., & Egikian, A. G. 1991, Ap&SS, 181, 73 Halliday, C., Carter, D., Bridges, T. J., et al 2006, MNRAS, 369, 97 Hurley-Keller, D., Morrison, H. L., Harding, P., & Jacoby, G. H. 2004, ApJ, 616, 804 Kniazev, A. Y., Grebel, E. K., Zucker, D. B., et al. 2014, AJ, 147, 16 Kwitter, K. B., Lehman, E. M. M., Balick, B., & Henry, R. B. C. 2012, ApJ, 753, 12 Kwok, S. 2000, The Origin and Evolution of Planetary Nebulae (Cambridge: Cambridge Univ.

Press) Marigo, P., Girardi, L., Groenewegen, M. A. T., & Weiss, A. 2001, A&A, 378, 958 Marigo, P., Girardi, L., Weiss, A., Groenewegen, M. A. T., & Chiosi, C. 2004, A&A, 423, 995 Massey, P., Olsen, K. A. G., Hodge, P. W., et al. 2006, AJ, 131, 2478 McConnachie, A. W., Irwin, M. J., Ferguson, A. M. N., et al. 2005, MNRAS, 356, 979 Méndez, R. H., Teodorescu, A. M., Schönberner, D., Jacob, R., & Steffen, M. 2008, ApJ, 681, 325 Merrett, H. R., Merrifield, M. R., Douglas, N. G., et al. 2006, MNRAS, 369, 120 Perinotto, M., Schönberner, D., Steffen, M., & Calonaci, C. 2004, A&A, 414, 993 Phillips, J. P. 2003, Astronomische Nachrichten, 324, 191

– 16 –

Reid, W. A., & Parker, Q. A. 2010, PASA, 27, 187 Sanders, N. E., Caldwell, N., McDowell, J., & Harding, P. 2012, ApJ, 758, 133 Schlafly, E. F., & Finkbeiner, D. P. 2011, ApJ, 737, 103 Schönberner, D., Jacob, R., Steffen, M., & Sandin, C. 2007, A&A, 473, 467 Thilker, D. A., Hoopes, C. G., Bianchi, L., et al 2005, ApJ, 619, L67 Vassiliadis, E., & Wood, P. R. 1993, ApJ, 413, 641

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 17 –

Fig. 1.— (Top) A model spectrum (black line) for a PN model close to its maximum [O III] λ5007 luminosity and with high excitation. This particular model was extracted from the Marigo et al. (2001, 2004) database of simplified evolutionary models, in which the photoionization of a spherically symmetric expanding shell is simulated with Ferland et al. (2013) Cloudy code v08.01. Some of the main contributors to the nebular flux are marked in the figure. In addition, there is a significant flux contribution from the stellar and nebular continuum, especially in the UV, as listed in Table 1. Also shown are filter throughput curves (colored lines) for filters: (from left to right) F275W, F336W, F475W, F814W, F110W, and F160W. (Bottom) A closer look at the continuum and weaker emission lines.

– 18 –

Fig. 2.— (Above) 3-color images of 3 PNe in PHAT. F814W, F475W, and F336W were used for the red, green, and blue images respectively so that PNe appear as bright, blue-green objects. PNe are marked by a small white circle. A larger white circle with a radius of 1^{′′} is centered at the M06 RA and Dec for each PN. (Below) The respective optical CMD with a filled, black circle denoting the PN and pluses denoting stars within 3^{′′} of the PN. A black line denotes the expected F475W magnitude estimated from the M06 m5007. From left to right the sources are M06 3015 (a typical PN), M06 938 (a bright, crowded PN), and M06 2665 (a bright, offset PN).

– 19 –

Fig. 3.— The linear relation between m5007 and F475W magnitudes of the final PHAT PNe catalog. This plot shows the strong dependence of F475W magnitude on [O III] λ5007 line strength. The linear fit was calculated taking into account the quoted M06 m5007 uncertainty as well as the PHAT Poisson errors from F475W photometry.

– 20 –

Fig. 4.— (Above) 3-color images of 3 M06 PN locations where no PN candidate could be determined in PHAT. A large white circle with a radius of 1^{′′} is centered at the M06 RA and Dec for each PN. (Below) The respective optical CMD of stars within 3^{′′} of the M06 PN location. A black line denotes the expected F475W magnitude estimated from the M06 m5007. From left to right the sources are M06 2721 (a large, bright H II region), M06 1378 (a possible Wolf Rayet star), and M06 731 (no PN candidate in PHAT).

– 21 –

Fig. 5.— Histograms of visually identified sources for all 711 M06 PNe that fall under the PHAT footprint. The faint end is dominated by fields where no PN could be identified in PHAT and there were no obvious sources of possible misdetection. A black line is drawn at the reported M06 completeness limit of m5007 = 23.75.

– 22 –

Fig. 6.— (Left) Blue crosses denote the location of matched PNe in the PHAT dataset over an optical image of M31 (credit and copyright: Martin Pugh

http://www.martinpughastrophotography.id.au/). The PHAT bricks currently cross matched

with M06 are outlined in solid black lines. The full PHAT footprint is outlined in dashed black lines. (Right) The location of non-PN sources (extended “HII” regions and non-PN “ST”ellar sources) over a GALEX UV image (Thilker et al. 2005). PN spatial density falls off radially while non-PN sources are clustered around UV bright regions. Non-PN objects were rejected without prior knowledge of their location.

– 23 –

Fig. 7.— The PN luminosity function of the PHAT PNe catalog using m5007 (above) and F475W (below). The solid line shows the best fit to the PNLF as described by Equation 3. Filled circles denote values brighter than the completeness limit of 24th magnitude. Open circles denote values fainter then 24th magnitude which were not used in the fit.

– 24 –

Fig. 8.— Black circles denote PNe. Background grey dots and contours indicate stars within 3^{′′} of a PN. An open triangle at (-2.8, 25.3) represents the F475W magnitude of the one PN with F814W SNR < 4. A rhomboid with sides labeled 1, 2, 3, and 4 outlines the boundaries of the PNe population. Crosses along the left side of the plot indicate median Poisson errors from the photometry of PNe binned by F475W. A reddening vector shows the extinction effect of A_V = 1. (Above) The normalized cumulative distribution of F475W-F814W for PNe (solid line) and stars within 3^{′′} of a PN (dashed line). (Right) The normalized cumulative distribution of F475W for PNe (solid line) and stars within 3^{′′} of a PN (dashed line). PNe exist in a unique bright-blue region of PHAT optical CMDs.

– 25 –

Fig. 9.— (Bottom, Left) Filled, blue circles denote PNe with detections in both UV filters. Open circles denote PNe without detections in both UV filters. Background grey dots and contours indicate all stars within 3^{′′} of a PN. (Bottom, Center) Filled, red circles denote PNe with detections in both NIR filters. Open circles denote PNe without detections in both NIR filters. Background grey dots and contours indicate all stars within 3^{′′} of a PN. A reddening vector shows the extinction effect of A_V = 1. (Top, Left) Distributions of F475W-F814W for all PNe (black line), PNe with UV detection (blue line), and PNe without UV detection (grey line). (Top, Right) Distributions of F475W-F814W for all PNe (black line), PNe with NIR detection (red line), and PNe without NIR detection (grey line). (Bottom, Right) Distributions of F475W for all PNe (black line), PNe with UV detection (blue line), and PNe with NIR detection (red line). UV and NIR detection is more common for PNe bright in F475W.

– 26 –

Fig. 10.— Filled, black circles denote PNe. Background grey dots indicate stars within 3^{′′} of a PN. Crosses along the right side of the plot indicate median Poisson errors from the photometry of PNe binned by F275W. A reddening vector shows the extinction effect of A_V = 1. (Above) The normalized cumulative distribution of F275W-F336W for PNe (solid line) and stars within 3^{′′} of a PN (dashed line). (Right) The normalized cumulative distribution of F275W for PNe (solid line) and stars within 3^{′′} of a PN (dashed line). There are only slight differences between PNe and the population of hot MS stars in the PHAT UV CMD.

– 27 –

Fig. 11.— Filled, black circles denote PNe. Background grey dots and contours indicate stars within 3^{′′} of a PN. Crosses along the right side of the plot indicate median Poisson errors from the photometry of PNe binned by F110W. A reddening vector shows the extinction effect of A_V = 1. (Above) The normalized cumulative distribution of F110W-F160W for PNe (solid line) and stars within 3^{′′} of a PN (dashed line). (Right) The normalized cumulative distribution of F110W for PNe (solid line) and stars within 3^{′′} of a PN (dashed line). PNe are bluer and brighter in the NIR than neighboring cool RGB and AGB stars.

– 28 –

Fig. 12.— Filled, black circles denote PNe. Background grey dots indicate stars within 3^{′′} of a PN. Crosses along the right side of the plot indicate median Poisson errors from the photometry of PNe binned by F814W-F110W. A reddening vector shows the extinction effect of A_V = 1. (Above) The normalized cumulative distribution of F475W-F814W for PNe (solid line) and stars within 3^{′′} of a PN (dashed line). (Right) The normalized cumulative distribution of F814W-F110W for PNe (solid line) and stars within 3^{′′} of a PN (dashed line). PNe are best distinguished from stars by their optical color.

– 29 –

Fig. 13.— The relationship between the difference of F475W and m5007 magnitudes and the F_{5007}/F_{Hβ} line ratio and Excitation classification (EC ≡ 0.45(F_{5007} /F_{Hβ} ), for low EC PNe) using emission line flux ratios from Sanders et al. (2012). Black points denote low EC PNe (EC < 5), for which Hβ makes a significant contributions to F475W flux. Grey points denote medium to high EC PNe (EC > 5), for which the EC cannot be accurately calculated from F_{5007}/F_{Hβ} . A solid line denotes a linear least squares fit between F 475W − m5007 and log (F_{5007}/F_{Hβ} ), (RMSE = ±2.0). The data has a correlation coefficient of 0.9. The largest source of error is the uncertainty in m5007 of 0.07 mag. Errors in F_{5007}/F_{Hβ} are often smaller than the plot symbols. Dashed lines indicate where F 475W −m5007 = 0.2 and where EC = 5. The majority of PNe with F 475W −m5007 < 0.2 also have EC < 5.

– 30 –

Fig. 14.— Same as Figure 8, but now large black circles and solid lines denote only PNe from “dust-free” regions. Grey crosses and dotted lines denote the full sample. The distribution is qualitatively very similar to that of the full sample suggesting the PHAT PNe catalog does not suffer large differential extinction.

– 31 –

Fig. 15.— Filled, black circles denote low EC PNe. Open circles denote medium to high EC PNe. Background grey dots and contours indicate stars within 3^{′′} of a PN. A rhomboid with sides labeled 1, 2, 3, and 4 outlines the boundaries of the PNe population. Crosses along the left side of the plot indicate median Poisson errors from the photometry of PNe binned by F475W. A reddening vector shows the extinction effect of A_V = 1. (Above) The normalized cumulative distribution of F475W-F814W for PNe (thin black line), low EC PNe (dark grey line), medium to high EC PNe (light grey line), and stars within 3^{′′} of a PN (dashed line). (Right) The normalized cumulative distribution of F475W for PNe (thin black line), low EC PNe (dark grey line), medium to high EC PNe (light grey line), and stars within 3^{′′} of a PN (dashed line). There is a distinct bright, blue population of medium to high EC PNe suggesting an evolutionary transition to higher F475W flux as increasing central star temperature increases excitation in the nebula.

– 32 –

Fig. 16.— Filled, black circles denote low EC PNe. Open circles denote medium to high EC PNe. Background grey dots indicate stars within 3^{′′} of a PN. Crosses along the left side of the plot indicate median Poisson errors from the photometry of PNe binned by F275W. A reddening vector shows the extinction effect of A_V = 1. Also shown are two unreddened P-AGB tracks for initial masses of 0.57M_⊙ and 0.63M_⊙. The tracks are nearly identical in this region of color-magnitude space. Open arrows indicate 0.57M_⊙ 20,000 and 30,000 year ages. Filled arrows indicate 0.63M_⊙ 2,000, 3,000, and 4,000 ages. (Above) The normalized cumulative distribution of F275W-F336W for PNe (thin black line), low EC PNe (dark grey line), medium to high EC PNe (light grey line), and stars within 3^{′′} of a PN (dashed line). (Right) The normalized cumulative distribution of F275W for PNe (thin black line), low EC PNe (dark grey line), medium to high EC PNe (light grey line), and stars within 3^{′′} of a PN (dashed line). Low EC PNe tend to be brighter and bluer than medium to high EC PNe in the PHAT UV CMD.

– 33 –

Fig. 17.— Filled, black circles denote low EC PNe. Open circles denote medium to high EC PNe. Background grey dots indicate stars within 3^{′′} of a PN. Crosses along the left side of the plot indicate median Poisson errors from the photometry of PNe binned by F336W. A reddening vector shows the extinction effect of A_V = 1. (Above) The normalized cumulative distribution of F336W-F475W for PNe (thin black line), low EC PNe (dark grey line), medium to high EC PNe (light grey line), and stars within 3^{′′} of a PN (dashed line). (Right) The normalized cumulative distribution of F336W for PNe (thin black line), low EC PNe (dark grey line), medium to high EC PNe (light grey line), and stars within 3^{′′} of a PN (dashed line). A separation in excitation becomes apparent when comparing emission flux to continuum flux.

– 34 –

Fig. 18.— Spectral energy distributions of PHAT PNe with detections in all six bandpasses. The left column of plots shows SEDs of low EC PNe sorted by EC. The right column of plots show SEDs of medium to high EC PNe sorted by m5007. All SED plots are color-ranked by relative F475W flux. Black lines denote a 50,000 K black body curve accounting for full system throughput and extinction-corrected for A_V = 0.17 (R_V = 3.1), the average foreground extinction for the PHAT region (Schlafly & Finkbeiner 2011). Increasing excitation correlates to increasing emission line flux over the underlying continuum in the F475W and F110W bandpasses.

– 35 –

Fig. 19.— (Left) Direct FWHM measurements of PNe (black circles) and the 50 brightest stars with F475W<25 around each PN (grey pluses). FWHM values greater than ∼3 are likely due to poor direct FWHM measurement of faint, crowded sources. (Right) Normalized cumulative histograms of FWHM for PNe (solid line) and stars (dashed line). The PHAT PNe catalog does not appear extended compared to neighboring stars.

– 36 –

Fig. 20.— The bright, green object in the center of the frame is M06 143 - a slightly resolved PN candidate.

– 37 –

Table 1. Flux Contribution by Filter

Filter Likely Main Flux Contributors

F275W Stellar Continuum, Nebular Continuum, [Fe IV] λ2836, [Fe IV] λ2829, [Fe IV] λ2567, [C IV] λ2529, He II λ2733, He II λ2511, He II λ2386, [Ar IV] λ2854 F336W Stellar Continuum, Nebular Continuum, Balmer Continuum, He II λ3203 F475W He II λ4686, H I λ4861, H I λ4340, [Ar IV] λ4740, [O III] λ5007, [O III] λ4959 F814W Stellar Continuum, Paschen Continuum, [Cr V] λ7979, He I λ7065, [S III] λ9069, [Ar III] λ7135 F110W Stellar Continuum, He II λ10120, He I λ10830, H I λ12820, [S III] λ9532, [S III] λ9069 F160W Stellar Continuum, He II λ4760

Note. — An extensive but incomplete list of likely flux contributors by filter.

– 38 –

Table 2. M31 PNe Photometric Catalog

M06 ID PHAT RA PHAT Dec F 275W F 336W F 475W F 814W F 110W F 160W EC^a zP N^b

26 11.469719 42.086807 · · · · · · 24.869 25.920 · · · · · · > 3.8 0.35 29 11.461526 42.113659 · · · 26.015 24.718 25.926 · · · · · · > 3.8 0.46 30 11.360975 42.142666 22.656 22.578 22.958 23.512 22.798 23.413 3.1 0.42 31 11.381368 42.144012 23.235 22.673 22.097 23.865 23.051 23.487 > 3.8 0.60 32 11.472247 42.147278 23.282 22.878 22.416 23.986 23.377 23.823 > 3.8 0.52 33 11.372000 42.149998 · · · · · · 24.827 25.762 24.550 25.225 > 3.8 0.31 34 11.431614 42.156788 23.545 22.882 22.850 24.346 23.592 24.253 > 3.8 0.57 44 11.530962 42.110489 22.766 22.619 22.917 23.720 23.121 23.540 3.4 0.31 45 11.525844 42.116840 23.178 22.295 21.837 23.356 22.570 22.878 > 3.8 0.49 46 11.508853 42.127369 · · · · · · 23.712 25.093 · · · · · · 3.5 0.37 . . . . . . . . . . . . . . . . . . . .

Note. — Table 2 is published in its entirety in the electronic edition of the Astrophysical Journal. A portion is shown here for guidance regarding its form and content.

aExcitation Classification (EC ≡ 0.45 × (F_{5007}/F_{Hβ} ), for EC < 5) as estimated by log(F_{5007}/F_{Hβ} ) = 0.7835 + 0.7003 (F 475W − m5007).

bThe standard score of the deviation from typical PNe identified in PHAT. See Section 2.2.2 for full derivation.

– 39 –

Table 3. Misidentified Extended H II Regions

M06 ID M06 RA M06 Dec M06 m5007 M06 ID M06 RA M06 Dec M06 m5007

35 11.471667 42.159944 23.90 52 11.660417 42.182833 22.93 53 11.679167 42.185806 21.31 54 11.543750 42.189306 24.33 55 11.638333 42.193917 20.60 56 11.535000 42.192000 21.03 57 11.642917 42.195306 17.75 58 11.674167 42.196722 24.10 59 11.672917 42.199167 22.39 60 11.544167 42.212194 20.97 62 11.680417 42.218917 24.26 64 11.645417 42.195833 22.08 84 11.142083 41.954194 23.41 96 11.211250 41.936028 24.84 103 11.318750 41.958861 24.43 106 11.393750 41.969889 23.70 109 11.366667 41.991667 24.30 117 11.291667 42.028944 22.73 120 11.292917 42.041056 21.21 121 11.222500 42.042806 20.83 125 11.197500 41.950194 22.46 126 11.197083 41.949361 20.92 139 11.435833 41.957500 21.99 147 11.637917 41.950833 23.49 150 11.640417 41.986750 24.02 163 11.625833 41.987694 22.78 241 11.129583 41.852500 23.86 242 11.124167 41.862889 24.08 243 11.158333 41.864722 22.23 246 11.125417 41.866167 22.65 257 11.183750 41.899778 21.29 262 11.247917 41.920083 24.35 268 11.191667 41.883028 23.50 279 11.413333 41.832139 23.39 285 11.405000 41.851889 21.10 295 11.434167 41.868667 21.20 298 11.428750 41.876278 21.67 301 11.430417 41.883417 19.67 307 11.406667 41.906722 22.84 322 11.581667 41.841889 22.11 324 11.573333 41.866194 19.19 327 11.555000 41.873556 21.66 446 11.285000 41.660750 22.30 448 11.327083 41.670500 21.64 481 11.298333 41.621306 22.08 482 11.327500 41.677833 24.12 494 11.431667 41.709944 22.32 659 11.252500 41.476778 20.03 660 11.253333 41.478361 21.43 661 11.187083 41.478083 22.74 739 11.291250 41.599917 21.51 741 11.308333 41.603917 21.42 954 10.913333 41.448028 20.35 996 10.979167 41.434611 21.93 999 11.160000 41.419861 20.89 1000 10.982917 41.442750 21.66 1020 11.197500 41.431500 21.90 1371 10.932917 41.193583 23.21 1377 10.945417 41.211056 22.46 1385 11.062917 41.258722 23.57 1699 10.895000 41.164944 19.97 2159 11.675000 42.262694 24.80 2581 11.564583 42.249167 24.53 2587 11.148333 41.935139 23.22 2589 11.416250 41.919278 23.11 2664 11.103750 41.627583 22.88 2669 11.296250 41.612583 22.18 2673 11.301667 41.619278 20.52 2674 11.299167 41.620250 20.06 2675 11.302500 41.621250 20.82 2678 11.309583 41.623639 21.73 2720 11.203333 41.453583 24.37 2721 11.187500 41.464028 20.60 2722 11.181250 41.465694 24.10 2994 11.244583 41.927028 20.15 3091 11.212917 41.923278 24.28 3158 10.895417 41.164583 19.86 3225 11.302083 41.621583 20.78

– 40 –

Note. — M06 sources that are visually extended in PHAT images and excluded from the PHAT PNe catalog. Most are likely H II regions.

– 41 –

Table 4. Misidentified Stellar Sources

M06 ID PHAT RA PHAT Dec F 275W F 336W F 475W F 814W F 110W F 160W

65 11.592355 42.143700 19.167 19.380 20.748 20.610 20.683 20.566 66 11.620730 42.196083 19.415 19.446 20.632 20.228 20.124 20.020 100 · · · · · · · · · · · · · · · · · · · · · · · · 105 11.379783 41.964077 23.464 22.513 21.697 20.973 20.722 20.429 111 11.204804 41.991951 22.436 22.297 23.064 22.518 · · · · · · 116 11.384217 42.012291 24.817 22.829 21.228 19.848 19.489 19.003 127 11.369970 41.954872 20.679 20.608 21.725 21.205 21.113 20.974 151 · · · · · · · · · · · · · · · · · · · · · · · · 152 11.703743 42.000370 21.215 21.010 21.024 19.468 · · · · · · 153 11.630049 42.009483 22.363 21.906 22.805 22.122 · · · · · · . . . . . . . . . . . . . . . . . .

Note. — M06 sources that are likely misidentified non-PN stellar sources and excluded from the PHAT PNe catalog. PHAT RA, Dec, and photometry is included when available. Table 4 is published in its entirety in the electronic edition of the Astrophysical Journal. A portion is shown here for guidance regarding its form and content.