arXiv:1503.05253v2 [astro-ph.IM] 26 Aug 2015

Prepared for submission to JHEP

Pulse-shape discrimination between electron and nuclear recoils in a NaI(Tl) crystal

H.S. Lee,^{d,1} G. Adhikari,^c P. Adhikari,^c S. Choi,^b I.S. Hahn,^g E.J. Jeon,^a H.W. Joo,^b W.G. Kang,^a G.B. Kim,^{a,b} H.J. Kim,^e H.O. Kim,^a K.W. Kim,^b N.Y. Kim,^a S.K. Kim,^b Y.D. Kim,^{a,c} Y.H. Kim,^{a,f} J.H. Lee,^f M.H. Lee,^a D.S. Leonard,^a J. Li,^a S.Y. Oh,^b S.L. Olsen,^a H.K. Park,^a H.S. Park,^f K.S. Park,^a J.H. Shim,^d and J.H. So^a aCenter for Underground Physics, Institute for Basic Science (IBS), Daejon 305-811, Korea bDepartment of Physics and Astronomy, Seoul National University, Seoul 151-747, Korea cDepartment of Physics, Sejong University, Seoul 143-747, Korea dDepartment of Physics, Ewha Womans University, Seoul 120-750, Korea eDepartment of Physics, Kyungpook National University, Daegu 702-701, Korea f Korea Research Institute of Standards and Science, Daejon 205-340, Korea g Department of Science Education, Ewha Womans University, Seoul 120-750, Korea

E-mail: hyunsulee@ewha.ac.kr

Abstract: We report on the response of a high light-output NaI(Tl) crystal to nuclear recoils induced by neutrons from an Am-Be source and compare the results with the response to electron recoils produced by Compton-scattered 662 keV γ-rays from a^{137}Cs source. The measured pulse-shape discrimination (PSD) power of the NaI(Tl) crystal is found to be significantly improved because of the high light output of the NaI(Tl) detector. We quantify the PSD power with a quality factor and estimate the sensitivity to the interaction rate for weakly interacting massive particles (WIMPs) with nucleons, and the result is compared with the annual modulation amplitude observed by the DAMA/LIBRA experiment. The sensitivity to spin-independent WIMP-nucleon interactions based on 100 kg·year of data from NaI detectors is estimated with simulated experiments, using the standard halo model.

1Corresponding author.

Contents

1 Introduction 1

2 Measurement of the pulse-shape discrimination 2

3 Expected sensitivity of a NaI(Tl) experiment using PSD 5

4 Conclusion 9

1 Introduction

The existence of non-baryonic cold dark matter has been widely supported by many astronomical observations [1–6]. The theoretically favored dark matter candidates are weakly interacting massive particles (WIMPs), which are well motivated by supersymmetric models [7, 8]. In the constrained minimal supersymmetric standard model, the lightest supersymmetric particle is a WIMP candidate (χ) with an expected mass of M_χ ≥ 100 GeV/c^2 [9]. Recently, a number of experimental observations [10–13] could be interpreted as direct detection signatures of WIMP-nucleon interactions. Moreover recent astronomical gamma-ray observations could be interpreted as indirect signatures of WIMP annihilations near the center of the Galaxy [14]. Therefore unambiguous tests of the direct WIMP detection signals are needed.

Among the direct searches for WIMPs, the DAMA/LIBRA experiment is unique in that it has been consistently reporting positive signals for an annual modulation of the nuclear recoil detection rate since 1998 [15], most recently with a 9.3σ statistical significance [10, 16, 17]. This annual modulation is consistent with WIMP scattering off nuclei inside NaI(Tl) detectors. If the annual modulation signal observed by DAMA/LIBRA is interpreted in the context of the standard halo model [18–20], the favored regions of WIMP-nucleon cross-section and WIMP-mass parameter space have been excluded by other direct search experiments [21–26]. This has motivated alternative explanations for the DAMA/LIBRA signal [27–30]. However, when non-trivial systematic differences in detector responses [31– 34] and reasonable modifications to the commonly used astronomical model for the WIMP distribution [35, 36] are considered, it remains possible to reconcile both the DAMA signal and the null observations [37, 38]. Therefore, it is important to devise experiments that search for the DAMA/LIBRA signal using the same technique but with higher sensitivity. To date, no independent, direct experimental verification of the DAMA/LIBRA signal has been performed.

To reproduce the DAMA/LIBRA observation, several experimental groups have started developing ultra-low-background NaI(Tl) crystals [39–41] with target background levels at or below those measured in the DAMA/LIBRA experiment. If this background reduction is

– 1 – successful, sizable experiments using more than 100 kg of crystals will be performed within the next few years. Accumulating a similar amount of data as that acquired with the DAMA/LIBRA experiment can test the DAMA/LIBRA annual modulation observation. However, this will require a long-term stable data taking over a period of at least three years.

On the other hand, we can extract a WIMP signature based on differences between the scintillation characteristics of nuclear and electron recoils using a so-called pulse-shape discrimination (PSD) analysis. This technique has been applied for WIMP searches with CsI(Tl) crystals [25, 42, 43] and NaI(Tl) crystals [44, 45]. In the past, the discrimination power of NaI(Tl) crystals has been much poorer than that of CsI(Tl) crystals [46–48]. However recently developed NaI(Tl) crystals grown by Alpha Spectra Inc. provide higher light yields [39, 41], and this makes it interesting to study their PSD performance and evaluate their sensitivity.

In this article, we present a new measurement of the PSD capability of a high lightoutput NaI(Tl) crystal. We measure the response to nuclear recoils induced by neutrons from a 300-mCi Am-Be neutron source and compare the results with the response to electron recoils induced by a^{137}Cs γ source. The Seoul National University neutron calibration facility [48] is used for this measurement. Using the results from these measurements, we estimate the sensitivity of a NaI(Tl) dark matter search experiment that uses PSD. A model-independent comparison between the expected upper limit on the nuclear recoil rate from the new NaI(Tl) experiment and the DAMA annual modulation amplitude promises a better understanding of the underlying scenarios of current dark matter search results.

2 Measurement of the pulse-shape discrimination

For the neutron-nuclei elastic scattering measurements, the neutron source was surrounded by liquid scintillator (LSC), lead, and polyethylene shields with a collimated aperture in the crystal direction as shown in Fig. 1. A small 2×2×1.5 cm^3 NaI(Tl) crystal made from the same, Alpha Spectra-grown, ingot as a large crystal (NaI 002) used for background measurements in the Yangyang underground laboratory [41] was used as a target. Two 3-inch photomultiplier tubes (PMTs) that were selected for high quantum efficiency (R12669SEL, Hamamatsu Photonics) were attached to each end of the NaI(Tl) target crystal, which was located at the exit of the collimated aperture of the neutron source. To identify neutrons that elastically scatter in the crystal, two neutron-tagging detectors, consisting of BC501A liquid scintillator contained in cylindrical 0.5 ℓ stainless-steel containers, were located at 90^∘ from the line between the neutron source and the NaI(Tl) crystal. The amplified signals from the crystal and the neutron detectors were recorded by 400-MHz flash analog-to-digital converters for 25-μs time intervals. The trigger condition for the NaI(Tl) crystal was one or more photoelectrons in each PMT within a 200 ns window, which is the same condition that was used for the underground data described in Ref. [41]. We additionally required a time coincidence between the NaI(Tl) crystal and one of the neutron detectors to occur within a 2 μs time window. For the electron recoil measurements, the crystal was irradiated with 662 keV γ-rays from a^{137}Cs source. The data were taken separately with the same

– 2 –

Figure 1. A setup for the neutron-nuclei elastic scattering measurements using the Am-Be neutron source.

setup, except for a lead and polyethylene beam stopper that was placed in the collimated aperture of the neutron source. The trigger condition for the NaI(Tl) crystal was the same; the neutron detectors were not used.

The energy calibration of the NaI(Tl) crystal was performed with 59.54 keV γ-rays from an^{241}Am source. A clustering algorithm described in Ref.s [42, 48] is applied to separate single photoelectrons as individual clusters and reduce the low energy baseline noise. The measured electron-equivalent energy was determined from the charge sum of the identified clusters, and we obtain a light yield for this crystal of approximately 16 photoelectrons/keV, which is consistent with the measured yield for large crystals grown by the same company [39, 41]. This light yield is approximately twice larger than that of crystals that were used in previous studies [46, 49, 50].

In the offline analysis, we require a tighter coincidence condition of less than approximately 100 ns between the signals from the NaI(Tl) crystal and the neutron detectors, as discussed in Ref. [48]. Neutron-induced signals in the neutron detectors are identified by taking advantage of the nuclear and electron recoil PSD capabilities of BC501A liquid scintillator [51, 52]. We recorded neutron data with the Am-Be neutron source over a three-month period.

Because of the different time distributions of the photoelectrons produced by nuclear and electron recoils in scintillation crystals, it is possible to use PSD to distinguish the nuclear recoil signals from the electron-recoil-dominant backgrounds. To characterize the time distributions, we use the natural logarithm of the mean decay time (ln(MT)), defined as ln(MT) = ln (∑ A_it_i ∑ A_i − t_0 ) , (2.1)

where A_i is the charge of the ith cluster, t_i is the time of the ith cluster, and t_0 is the time of the first cluster. Here, only clusters within 1.5μs from t_0 are considered. Figure 2 shows the ln(MT) distributions for the nuclear and electron recoil events in the NaI(Tl) crystal for 1 keV bins of visible energy for the range 1 < E < 5 keV. In this figure, differences

– 3 –

(a) 1-2 keV (b) 2-3 keV

(c) 3-4 keV (d) 4-5 keV

Figure 2. The ln(MT) distribution of neutron-induced events (open circle) from the Am-Be source and electron-induced events (filled circles) from the^{137}Cs source. The results of fits using asymmetric Gaussian functions are superimposed.

in the ln(MT) distributions between nuclear recoils from electron recoils are evident, even for energies as low as 1 keV. This result is significantly improved compared with those of previous studies that reported PSD capabilities only for energies of 4 keV and higher [44– 46]. This gives us confidence to design an experiment for WIMP searches with NaI(Tl) crystals based on the PSD performance.

We performed fits to the ln(MT) distributions using asymmetric Gaussian functions that are shown in the plots, where good agreement with the data is observed. Similar fits were performed for each 1 keV energy bin from 1 to 14 keV for nuclear and electron recoil events, and Fig. 3 shows the most probable value and the root mean square (RMS) of ln(MT) for electron and nuclear recoil data. As shown in the plots, the separation power is reduced at low energy, but some PSD capability persists at energies as low as 1 keV, which is even better than CsI(Tl) crystals [47, 48].

We characterize the PSD power using a quality factor [53] that is commonly used to characterize WIMP-search detectors [46–48] and defined as K ≡ β(1 − β) (α − β)^2

, (2.2)

– 4 –

(a) (b)

Figure 3. (a) The most probable value of ln(MT) from the asymmetric Gaussian fits for each energy bin for neutron-induced (open circles) and electron-induced (filled circles) events, respectively. (b) The root mean square (RMS) of ln(MT) as a function of energy for neutron-induced (open circle) and electron-induced (filled circle) events.

where α and β are fractions of the nuclear and electron recoil events that satisfy the selection criteria, respectively, where we have varied these criteria to provide the best (i.e., the minimum) value of the quality factor. For a detector with perfect discrimination, α = 1 and β = 0, thus a smaller quality factor means a better PSD power. Figure 4 shows the measured quality factor of the NaI(Tl) crystal studied here compared with results from previous NaI(Tl) [46] and CsI(Tl) crystal measurements [47, 48]. As shown in this figure, the quality factor of this new, high light-yield NaI(Tl) crystal is approximately one order of magnitude lower than that from previous studies [46]. To demonstrate that this is mainly due to the approximately two times higher light yield of the new crystal, we adjust our results by assuming a light yield similar to typical NaI(Tl) crystals and find results that agree with previous measurements. We also find that the quality factor of this crystal is slightly better than that of CsI(Tl) crystals, especially at energies below 6 keV. This promises relatively good sensitivity for low-mass WIMP detection with these NaI(Tl) crystals.

3 Expected sensitivity of a NaI(Tl) experiment using PSD

The Korea Invisible Mass Search (KIMS) Collaboration recently joined a consortium that is developing low-background, high light-yield NaI(Tl) crystals for attempts to reproduce the DAMA/LIBRA observation. We have achieved a background level of approximately 3 dru at 6 keV with a below 2 keV energy threshold [41]. Because we already identified the significant backgrounds of the NaI(Tl) crystals as being due to^{210}Pb and^{40}K contaminations, the background levels of future crystals that are produced as part of this program will be significantly reduced. Even without internal background reduction, it should be possible to achieve a ∼2 dru background level by immersing the NaI(Tl) crystal array inside a liquid scintillator box that serves as an active veto. After growing NaI crystals with a total mass of 100 kg, which may be completed by the end of 2015, the KIMS collaboration

– 5 –

Figure 4. The measured quality factor of the new NaI(Tl) crystal compared to previous NaI(Tl) measurement by Gerbier et al. [46] and CsI(Tl) measurements using monoenergetic neutron beam [47] as well as the Am-Be source [48].

plans to start the KIMS-NaI experiment that, after three years of stable operation, could unambiguously confirm or refute the DAMA/LIBRA annual modulation signals without any model dependence.

In the meantime, we plan to extract information about the WIMP interaction using NaI(Tl) crystals as early as possible. One of our goals is to extract the WIMP interaction signal using data from the initial period of one year or less. Because of the very good PSD power of the new NaI(Tl) crystals, the extraction of a meaningful cross section limit for WIMP-nucleon interactions in NaI should be possible with a small data set. To quantify the performance of this measurement, we conservatively estimate the sensitivity of the KIMS- NaI experiment by assuming a 100 kg NaI(Tl) crystal array with a 2 dru background, a 1-year exposure, and a 2 keV energy threshold.

We performed simulated experiments to extract the upper limits of the nuclear recoil events. For events in each 1 keV bin, we ran 2,000 simulated experiments based on the expected electron recoil background, assuming no nuclear recoil signal events. We construct Bayesian likelihoods that are formed as products of the measured log(MT) probability

– 6 –

(a) (b)

Figure 5. (a) The median expected 90%-confidence-level upper limits (points) with 1σ standard deviation probabilities (error bars) on the rate of nuclear recoil events from the KIMS-NaI 1- year experiment (filled circle) are compared with the annual modulation amplitudes observed by the DAMA/LIBRA experiment (open circle). (b) Expected 90%-confidence-level upper limit on the annual modulation amplitude as a function of the annual modulation ratio of WIMP-nucleon interaction from the KIMS-NaI experiment, which is compared with the DAMA/LIBRA observation in the 2-6 keV energy range.

distributions for nuclear recoil signals and electron recoil backgrounds. For each simulated experiment, 90% confidence level (CL) limits are determined such that 90% of the posterior densities of the nuclear recoil event rates fall below the limit. In Fig. 5 (a), we present the median expected 90% CL upper limits (points) together with 1σ standard deviation probability (error bars) of the nuclear recoil events for each 1 keV bin. The DAMA/LIBRA annual modulation amplitudes for each 0.5 keV bin from Ref. [19] are overlaid in the plot for comparison. At low energies, the KIMS-NaI expected upper limits of the nuclear recoil rates corresponding to the WIMP interaction with NaI(Tl) nuclei are consistent with the annual modulation amplitudes of the DAMA/LIBRA experiment.

To make a direct comparison between the expected nuclear recoil rate from the KIMS- NaI experiment and the annual modulation amplitudes observed by the DAMA/LIBRA experiment, we need to know the expected ratio of the annual modulation amplitude to the total WIMP-nucleon interaction rate, which depends on the models of the halo structure as well as the underlying theory of the WIMP candidate. In other words, a WIMP-nucleon interaction limit determined using the PSD analysis, can constrain the ratio of the annual modulation amplitude to the total rate of the WIMP-nucleon interaction, which is model-independent. The annual modulation amplitude observed by the DAMA/LIBRA experiment for the 2–6 keV events with the highest significance is 0.0112±0.0012 dru [10]. The expected 90% CL upper limit of the nuclear recoil rate from the KIMS-NaI experiment is 0.0104±0.0050 dru. In Fig. 5 (b), we convert the expected upper limits of the nuclear recoil rate from the KIMS-NaI experiment into an annual modulation amplitude as a function of the annual modulation ratio from the total WIMP-nucleon interaction rate. We find that the KIMS-NaI experiment can investigate the allowed parameter space of the DAMA 2σ signal region for any model with an annual modulation ratio less than 85%, assuming

– 7 –

Figure 6. The median expected (black dotted line) 90%-confidence-level upper limit on the WIMP-nucleon spin-independent cross-section assuming the background-only hypothesis, shown together with WIMP-induced DAMA/LIBRA 3σ-allowed region (solid contour). The dark (green) and light (yellow) shaded bands indicate the 1σ and 2σ standard deviation probability regions in which the limits are fluctuated. The red dotted line indicates the expected limit assuming an optimistic background level of 1 dru and an energy threshold of 1 keV.

the median expectation shown in Fig. 5 (b).

Assuming the standard halo model [18], we estimate the sensitivity of the KIMS-NaI experiment as the predicted cross-section limits for the WIMP-nucleon spin-independent interactions in case of no signal for an ensemble of Monte-Carlo experiments. For each experiment, we determine simulated log(MT) distribution for an electron-recoil-background only hypothesis. The rate of background, assuming a 1-year exposure of a 100 kg array of NaI(Tl) detectors with 2 dru background rate, has Poissonian fluctuations. We then fit the log(MT) spectrum with signal plus background hypothesis with flat priors for both the signal and the background rate. We construct a Bayesian likelihood for each 1 keV bin from fits to the log(MT) distribution. The overall likelihood is obtained by multiplying the likelihood for each bin between 2 and 10 keV considering the energy-dependent rate of WIMP interaction for WIMP masses between 5 GeV/c^2 and 10000 GeV/c^2. The 90% CL limit for each simulated experiment is determined such that 90% of the posterior density of the WIMP-nucleon cross-section falls below the limit. The median expected 90% CL limits and 1σ and 2σ standard-deviation probability regions are calculated from the result of 2,000 simulated experiments. To directly compare these results with the DAMA/LIBRA allowed signal region, we use quenching factors from Ref. [19] of 0.3 and 0.09 for Na and I, respectively. The quenching factor is the fraction of the recoil energy deposited by a

– 8 –

WIMP with respect to the energy deposited by an electron (or γ-ray). Figure 6 shows the expected median limit, and 1σ and 2σ standard deviation probability regions, of the KIMS- NaI experiment using PSD analysis. We also include results from an optimistic KIMS-NaI expected limit of a 1 dru background rate with a 1 keV energy threshold. These results are further compared with the DAMA/LIBRA 3σ allowed signal region from Ref. [19]. As shown in this figure, the median expected limit from the KIMS-NaI 100 kg·year data can investigate the DAMA/LIBRA 3σ regions even for the conservative threshold and background level assumptions. This comparison, based on measurements using the same target-detector material, may provide a better understanding of the nature of dark matter and of the DAMA/LIBRA signature. If the KIMS-NaI experiment obtains similar annual modulation signatures using NaI(Tl) crystals in the future, this PSD measurement will provide valuable information about the annual modulation events that will help determine whether or not they originate from WIMP-induced nuclear recoil events.

4 Conclusion

We report measurements of the PSD characteristics for the nuclear and electron recoil events of the NaI(Tl) crystal. Because of the high light output of recently developed NaI(Tl) crystals, we find a PSD quality factor that is approximately one order of magnitude better than those of previously studied crystals. The influence of this good PSD capability on the expected sensitivity of the KIMS-NaI experiment is evaluated. Model independent and dependent comparisons of the DAMA/LIBRA annual modulation signature give confidence that the KIMS-NaI experiment can investigate interesting regions of parameter space with one year of accumulated data.

Acknowledgments

This research was funded by the Institute for Basic Science (Korea) under project code IBS-R016-D1 and was supported by the Basic Science Research Program through the National Research Foundation of Korea funded by the Ministry of Education (NRF-2011-35B- C00007).

References

[1] D. Clowe, A. Gonzalez, and M. Markevitch, Weak-lensing mass reconstruction of the interacting cluster 1E 0657-558: direct evidence for the existence of Dark Matter, Astrophys. J. 604 (2004) 596.

[2] D. Clowe et al., A direct empirical proof of the existence of Dark Matter, Astrophys. J. 648 (2006) L109.

[3] M. Persic, P. Salucci, and F. Stel, The universal rotation curve of spiral galaxies - I. The Dark Matter connection, Mon. Not. Roy. Astron. Soc. 281 (1996) 27.

[4] D. Larson et al., Seven-year Wilkinson microwave anisotropy probe (WMAP) observation:

Power spectra and WMAP-derived parameters, Astrophys. J. Suppl. 192 (2011) 16.

– 9 –

[5] E. Komatsu et al., Seven-year Wilkinson microwave anisotropy probe (WMAP) observation:

Cosmological interpretation, Astrophys. J. Suppl. 192 (2011) 18.

[6] P. A. R. Ade et al. (Planck Collaboraion), Plank 2013 results. XVI. Cosmological parameters, Astron. Astrophys. 571 (2014) A16.

[7] G. Jungman, M. Kamionkowski, and K. Griest, Supersymmetric Dark Matter, Phys. Rep.

267 (1996) 195.

[8] K. A. Olive et al. (Particle Data Group), Review of particle physics, Chin. Phys. C 38 (2014) 090001.

[9] G. Bertone et al., Global fits of the cMSSM including the first LHC and XENON100 data, JCAP 01 (2012) 015; C. Strege et al., Global fits of the cMSSM and NUHM including the LHC Higgs discovery and new XENON100 constraints, JCAP 04 (2013) 013.

[10] R. Bernabei et al. (DAMA/LIBRA Collaboration), Final model independent result of DAMA/LIBRA-phase1, Eur. Phys. J. C 73 (2013) 2648.

[11] G. Angloher et al., Results from 730 kg days of the CRESST-II Dark Matter search, Eur.

Phys. J. C 72 (2012) 1971.

[12] C. E. Aalseth et al. (CoGeNT Collaboration), Results from a search for light-mass Dark Matter with a p-type point contact germanium detector, Phys. Rev. Lett. 106 (2011) 131301; C. E. Aalseth et al. (CoGeNT Collaboration), CoGeNT: A search for low-mass Dark Matter using p-type point contact germanium detectors, Phys. Rev. D 88 (2013) 012002.

[13] R. Agness et al. (CDMS Collaboration), Silicon detector Dark Matter results from the final exposure of CDMS II, Phys. Rev. Lett. 111 (2013) 251301.

[14] D. Hooper and T.R. Slatyer, Two emission mechanisms in the Fermi bubbles: A possible signal of annihilating Dark Matter, Phys. Dark Univ. 2 (2013) 118; T. Daylan et al., The characterization of the gamma-ray signal from the central Milky Way: A compelling case for annihilating Dark Matter, arXiv:1402.6703.

[15] R. Bernabei et al. (DAMA Collaboration), Searching for WIMPs by the annual modulation signature, Phys. Lett. B 424 (1998) 195.

[16] R. Bernabei et al. (DAMA/LIBRA Collaboration), First results from DAMA/LIBRA and the combined results with DAMA/NaI, Eur. Phys. J. C 56 (2008) 333.

[17] R. Bernabei et al. (DAMA/LIBRA Collaboration), New results from DAMA/LIBRA, Eur.

Phys. J. C 67 (2010) 39.

[18] K. Freese, J. A. Frieman and A. Gould, Signal modulation in cold Dark Matter detection, Phys. Rev. D 68 (2003) 082002.

[19] C. Savage et al., Compatibility of DAMA/LIBRA Dark Matter detection with other searches, JCAP 04 (2009) 39.

[20] K. Freese, M. Lisanti, and C. Savage, Colloquium: Annual modulation of Dark Matter, Rev.

Mod. Phys. 85 (2013) 1561.

[21] J. Angle et al. (XENON10 Collaboration), Search for light Dark Matter in XENON10 data, Phys. Rev. Lett. 107 (2011) 051301.

[22] Q. Yue et al. (CDEX Collaboration), Limits on light WIMPs from the CDEX-1 experiment with a p-type point-contact Germanium detector at the China Jingping Underground Laboratory, Phys. Rev. D 90 (2014) 091701.

– 10 –

[23] D. S. Akerib et al. (LUX Collaboration), First results from the LUX Dark Matter experiment at the Stanford Underground Research Facility, Phys. Rev. Lett. 112 (2014) 091303.

[24] R. Agnese et al. (SuperCDMS Collaboration), Search for low-mass weakly interacting massive particles using voltage-assisted calorimetric ionization detection in the SuperCDMS experiment, Phys. Rev. Lett. 112 (2014) 041302.

[25] S. C. Kim et al. (KIMS Collaboration), New limits on interactions between weakly interacting massive particles and nucleons obtained with CsI(Tl) crystal detectors, Phys. Rev. Lett. 108 (2012) 181301.

[26] H. S. Lee et al. (KIMS Collaboration), Search for low-mass Dark Matter with CsI(Tl) crystal detectors, Phys. Rev. D 90 (2014) 052006.

[27] A. V. Belikov et al., CoGeNT, DAMA, and light neutralino Dark Matter, Phys. Lett. B 705 (2011) 82.

[28] M. I. Gresham and K. M. Zurek, Light Dark Matter anomalies after LUX, Phys. Rev. D 89 (2014) 016017.

[29] S. K. Lee et al., Effect of gravitational focusing on annual modulation in Dark-Matter direct-detection experiments, Phys. Rev. Lett. 112 (2014) 011301.

[30] J. H. Davis, Fitting the annual modulation in DAMA with neutrons from muons and neutrinos, Phys. Rev. Lett. 113 (2014) 081302.

[31] G. Plante et al., New measurement of the scintillation efficiency of low-energy nuclear recoils in liquid Xenon, Phys. Rev. C 84 (2011) 045805.

[32] D. Barker and D. M. Mei, Germanium detector response to nuclear recoils in searching for Dark Matter, Astropart. Phys. 38 (2012) 1.

[33] J. I. Collar, Quenching and channeling of nuclear recoils in NaI(Tl): Implications for Dark-Matter searches, Phys. Rev. C 88 (2013) 035806.

[34] J. H. Lee, Measurement of the quenching and channeling effects in a CsI crystal used for a WIMP search, Nucl. Instrum. Methods Phys. Res., Sect. A 782 (2015) 133.

[35] P. J. Fox, J. Liu, and N. Weiner, Integrating out astrophysical uncertainties, Phys. Rev. D 83 (2011) 103514.

[36] Y. Y. Mao, L. E. Strigari, and R. H. Wechsler, Connecting direct Dark Matter detection experiments to cosmologically motivated halo models, Phys. Rev. D 89 (2014) 063513.

[37] C. Arina, E. D. Nobile, and P. Panci, Dark matter with pseudoscalar-mediated interactions explains the DAMA signal and the galactic center excess, Phys. Rev. Lett. 114 (2015) 011301.

[38] R. Bernabei et al. (DAMA/LIBRA Collaboration), The Dark Matter annual modulation results from DAMA/LIBRA, EPJ Web Conf. 70 (2014) 00043.

[39] J. Amare et al., Preliminary results of ANAIS-25, Nucl. Instrum. Methods Phys. Res., Sect.

A 742 (2014) 187.

[40] J. Cherwinka et al. (DM-Ice Collaboration), First data from DM-Ice17, Phys. Rev. D 90 (2014) 092005.

[41] K. W. Kim et al., Test on NaI(Tl) crystals for WIMP search at the Yangyang Underground Laboratory, Astropart. Phys. 62 (2015) 249.

– 11 –

[42] H. S. Lee et al. (KIMS Collaboration), First limit on WIMP cross section with low background CsI(Tl) crystal detector, Phys. Lett. B 633 (2006) 201.

[43] H. S. Lee et al. (KIMS Collaboration), Limits on interactions between weakly interacting massive particles and nucleons obtained with CsI(Tl) crystal detectors, Phys. Rev. Lett. 99 (2007) 091301.

[44] R. Bernabei et al., New limits on WIMP search with large-mass low-radioactivity NaI(Tl) set-up at Gran Sasso, Phys. Lett. B 389 (1996) 757.

[45] G. J. Alner et al. (UK Dark Matter Collaboration), Limits on WIMP cross-sections from the NAIAD experiment at the Boulby Underground Laboratory, Phys. Lett. B 616 (2005) 17.

[46] G. Gerbier et al., Pulse shape discrimination and Dark Matter search with NaI(Tl) scintillator, Astropart. Phys. 11 (1999) 287.

[47] H. Park et al., Neutron beam test of CsI crystal for Dark Matter search, Nucl. Instrum.

Methods Phys. Res., Sect. A 491 (2002) 460.

[48] H. S. Lee et al., Neutron calibration facility with an Am-Be source for pulse shape discrimination measurement of CsI(Tl) crystals, JINST 9 (2014) P11015.

[49] B. Ahmed et al., The NAIAD experiment for WIMP searches at Boulby mine and recent results, Astropart. Phys. 19 (2003) 691.

[50] R. Bernabei et al., The DAMA/LIBRA apparatus, Nucl. Instrum. Methods Phys. Res., Sect.

A 592 (2008) 3.

[51] H. J. Kim et al., Measurement of the neutron flux in the CPL underground laboratory and simulation studies of neutron shielding for WIMP searches, Astropart. Phys. 20 (2004) 549.

[52] J. J. Zhu et al., Performance of a large volume liquid scintillation detector for the measurement of fast neutrons, J. Kor. Phys. Soc. 47 (2005) 202.

[53] R. J. Gaiskell et al., The statistics of background rejection in direct detection experiments for Dark Matter, Nucl. Phys. Proc. Suppl. B 51 (1996) 279.

– 12 –