arXiv:1503.06191v1 [nucl-ex] 20 Mar 2015

Three-body correlations in the ground-state decay of^{26}O

Z. Kohley,^{1, 2} T. Baumann,^1 G. Christian,^{1, 3, ∗} P.A. DeYoung,^4 J.E. Finck,^5 N. Frank,^6 B. Luther,^7 E. Lunderberg,^{4, †} M. Jones,^{1, 3} S. Mosby,^{1, 3, ‡} J. K. Smith,^{1, 3, ∗} A. Spyrou,^{1, 3} and M. Thoennessen^{1, 3} 1National Superconducting Cyclotron Laboratory, Michigan State University, East Lansing, Michigan 48824, USA 2Department of Chemistry, Michigan State University, East Lansing, Michigan 48824, USA 3Department of Physics & Astronomy, Michigan State University, East Lansing, Michigan 48824, USA 4Department of Physics, Hope College, Holland, Michigan 49423, USA 5Department of Physics, Central Michigan University, Mt. Pleasant, Michigan, 48859, USA 6Department of Physics & Astronomy, Augustana College, Rock Island, Illinois, 61201, USA 7Department of Physics, Concordia College, Moorhead, Minnesota 56562, USA (Dated: October 1, 2017)

Background: Theoretical calculations have shown that the energy and angular correlations in the three-body decay of the two-neutron unbound^{26}O can provide information on the ground-state wavefunction, which has been predicted to have a dineutron configuration and 2n halo structure.

Purpose: To use the experimentally measured three-body correlations to gain insight into the properties of^{26}O, including the decay mechanism and ground-state resonance energy.

Method:^{26}O was produced in a one-proton knockout reaction from^{27}F and the^{24}O +n + n decay products were measured using the MoNA-Sweeper setup. The three-body correlations from the^{26}O ground-state resonance decay were extracted. The experimental results were compared to Monte Carlo simulations in which the resonance energy and decay mechanism were varied.

Results: The measured three-body correlations were well reproduced by the Monte Carlo simulations but were not sensitive to the decay mechanism due to the experimental resolutions. However, the three-body correlations were found to be sensitive to the resonance energy of^{26}O. A 1σ upper-limit of 53 keV was extracted for the ground-state resonance energy of^{26}O.

Conclusions: Future attempts to measure the three-body correlations from the ground-state decay of^{26}O will be very challenging due to the need for a precise measurement of the^{24}O momentum at the reaction point in the target.

PACS numbers: 21.10.Tg, 23.90.+w, 25.60.-t, 29.30.Hs

I. INTRODUCTION

Exploring the limits of the chart of the nuclides provides fundamental benchmarks for theoretical calculations and opportunities to discover new phenomena [1– 4]. Recently, experimental and theoretical studies of two-proton (2p) and two-neutron (2n) unbound systems have garnered significant interest [5–7]. These systems allow for the properties and decay mechanisms of nuclei with extreme neutron-to-proton ratios, existing beyond the driplines, to be examined. Of particular interest are the correlations present in the decay of these three-body systems which can offer new insights into the initial structure and configuration of the nucleus [7–14]. At the driplines, unique situations can present themselves in which the sequential decay process is forbidden and the “true” two-nucleon decay can be observed [15]. While substantial progress has been made in the theoret-

∗ Present address: TRIUMF, Vancouver, British Columbia V6T 2A3, Canada † Present address: National Superconducting Cyclotron Laboratory, Michigan State University, East Lansing, Michigan 48824, USA ‡ Present address: Los Alamos National Laboratory, Los Alamos, New Mexico 87545, USA

ical descriptions of the 2p decay mechanism, resulting in impressive reproductions of experimental measurements, theoretical frameworks for describing the full three-body decay of 2n unbound systems are still at an early stage and appear to pose new challenges in comparison to the 2p decay [7, 9–11, 16, 17].

While the correlations from the decays of a wide range of 2n unbound systems have been measured (^5H [18], 10He [12, 19],^{11}Li (excited state) [20],^{13}Li [12, 21], 14Be (excited state) [14], and^{16}Be [22]), the^{26}O system provides a particularly interesting case to examine in light of recent experimental and theoretical work. Currently, constraints on the^{26}O ground-state resonance energy of < 200 keV and < 40 keV have been reported by the MoNA collaboration [23] and R3B collaboration [24], respectively. Thus, the sequential decay of^{26}O through 25O, with a ground state unbound by ∼ 770 keV [24, 25], is forbidden and^{26}O must decay directly to^{24}O through the simultaneous emission of two neutrons. These constraints have provided a sensitive observable for ab initio-type calculations examining the role of three-nucleon forces and continuum effects [26–29]. Furthermore, theoretical calculations of Grigorenko et al. suggested that 26O would be a candidate for 2n radioactivity assuming a pure [d_{3/2}]^2 neutron configuration and near threshold ground-state resonance [30]. Through the use of the decay-in-target technique [31], the MoNA collaboration extracted a half-life for^{26}O of 4.5^{+1.1}_{−1.5}(stat) ± 3(syst) picoseconds which suggested the possibility for two-neutron radioactivity [32]. Based on the calculations of Grigorenko et al. a t_{1/2} = 4.5 ps would only require the decay energy to be < 100 keV [30]. However, the presence of even a small [s_{1/2}]^2 component in the^{26}O wavefunction would dominate the width of the decay (and lifetime). New detailed calculations from Grigorenko et al. using the three-body hyperspherical harmonics cluster model lowered the original constraint to E_{decay} < 1 keV for the measured^{26}O lifetime [17]. Estimates from the continuum shell-model, assuming a sequential decay, reported a similar constraint of E_{decay} ≲ 0.5 keV [33]. Therefore, it is crucial that the^{26}O decay energy be further constrained by experimental measurements.

In addition to the theoretical constraints on the^{26}O decay energy, full three-body calculations of the decay correlations have been reported by Grigorenko et al. [17] as well as by Hagino and Sagawa [34]. The results show that the three-body correlations are sensitive to both the initial wavefunction and the properties of the decay mechanism including the final-state nn interaction, recoil effects, and sub-barrier configuration mixing or rescattering of the d−wave neutrons into lower ℓ orbitals during the decay [17, 34]. The predictions of the ground state wavefunction added additional interest since the model of Grigorenko et al. suggested^{26}O would have a strong halo structure with a rms radius of the valence neutrons around 5.7 fm [17] and the model of Hagino and Sagawa showed the valence neutrons to be in a strong dineutron configuration [34]. Both theoretical frameworks predicted that these configurations would be manifested in the three-body decay correlations. One specific signature shown in both models is that the distribution of angles between the two neutrons (θ_{nn}) would be peaked near 180^∘.

In this article, we extract the experimental energy and angular correlations in the Jacobi coordinate system from the three-body decay of the^{26}O ground-state resonance. The experimental distributions are compared to a dineutron model, a phase space model, and the theoretical calculation from Hagino and Sagawa. The sensitivity of the experimental results to the decay mode and ground-state resonance energy are presented.

II. EXPERIMENTAL DETAILS AND ANALYSIS

Since the experimental details have already been provided in Refs. [23, 32, 35] where the ground state resonance and lifetime measurements were reported, only a brief overview is presented. An 82 MeV/u^{27}F radioactive ion beam was produced at the National Superconducting Cyclotron Laboratory at Michigan State University from the projectile fragmentation of a 140 MeV/u^{48}Ca primary beam. The 2n-unbound^{26}O was produced from a one-proton knockout of the^{27}F secondary beam using a 705 mg/cm^2 Be reaction target. The^{26}O decayed into^{24}O + 2n in the reaction target. The triple coincidence measurement was accomplished using the MoNA- Sweeper setup [36–40] and allowed for the invariant mass and correlations between the decay products of^{26}O to be determined.

Measurements of 2n decays require the discrimination of the “true” 2n events from the “false” 2n background which is generated from a single neutron producing multiple hits within the array. To remove the majority of false 2n events from the subsequent analysis, we applied the same causality cuts as used in our previous works reporting on^{26}O [23, 32, 35]. The causality cuts required the first two time ordered interactions within MoNA to have a spatial separation of > 25 cm and a relative velocity > 7 cm/ns. After applying the causality cuts, the false 2n component present in the experimental spectra is nearly negligible.

In order to isolate the ground state decay of^{26}O, only events with E_{decay} < 0.7 MeV were selected. This selection was chosen to minimize any contribution from the decay of the first excited state of^{26}O. Recent calculations by Bogner et al. [27] and Hagino and Sagawa [41] indicate that the 2^+ state is likely between 1 and 2 MeV. The E_{decay} spectrum with the 0.7 MeV cut is shown in Fig. 1(a). The full E_{decay} spectrum can be seen in Fig. 1 of Ref. [32].

The T and Y Jacobi coordinate systems, illustrated in Fig. 2, were used to define the angular and energy correlations in the three-body decay of^{26}O. The threebody correlations can be fully described by the energy, E_x, and angle, cos(θ_k), defined in each Jacobi system as,

E_x =

(m_1 + m_2)k^2_x

2m_1m_2

(1a)

cos(θ_k) = k_x · k_y k_xk_y (1b)

with the Jacobi momenta k_x and k_y defined as,

k_x = m_2k_1 − m_1k_2

m_1 + m_2

(2a)

k_y = m_3(k_1 + k_2) − (m_1 + m_2)k_3 m_1 + m_2 + m_3

. (2b)

The mass and momentum of each particle is labeled as m_i and k_i, respectively. As depicted in Fig. 2, E_x represents the energy in the two-body system defined by particles 1 and 2, while θ_k represents the angle between that twobody system and particle 3 . E_x is often reported relative to the total three body decay energy (E_T ). The experimental E_x/E_T and cos(θ_k) distributions for the T and Y systems, with the causality cuts and E_{decay} <0.7 MeV criteria, are shown in panels (b), (c), (e), and (f) of Fig. 1.

III. SIMULATIONS

Interpretation of the data requires comparisons with detailed simulations of the experimental setup. A Monte

FIG. 1. (Color online) (a) Three-body decay energy spectrum, (b) Jacobi relative energy in T system, (c) Jacobi relative energy in the Y system, (d) relative velocity spectrum, (e) Jacobi angle in the T system, and (f) Jacobi angle in the Y system from the decay of^{26}O. The experimental data are compared with simulations using three different decay modes and a half-life of 4 ps. All results are gated on E_{decay} < 0.7 MeV and have the causality cuts applied. The remaining false 2n component in the spectra, based on the Geant4 simulation, is shown as the solid grey area.

FIG. 2. Illustration of the T and Y Jacobi coordinate systems used to define the energy and angular correlations of the three body decay.

Carlo simulation which included the incoming beam characteristics, reaction kinematics, and detector resolutions was utilized in the subsequent analysis [42]. The interactions of the neutrons within MoNA were modeled using the Geant4 framework [43, 44] with the custom neutron interaction model menate r [42, 45]. This allowed the results of the Monte Carlo simulation to be treated identically to the experimental data.

The ground state resonance of^{26}O was simulated with a Breit-Wigner lineshape having a resonance energy, E_r, and a decay width, Γ. The energy and angular correlations of the^{24}O + n + n system were simulated assuming three different decay models: a phase-space decay [46, 47], a dineutron decay [21], and a decay model based on the theoretical calculations of Hagino and Sagawa [34]. The phase-space decay model simulates the simultaneous breakup of^{26}O→^{24}O+n + n assuming that the particles do not interact during the decay process [21, 22, 46, 47]. The dineutron decay model, described in Refs. [21, 48], simulates a two-step process where a dineutron is emitted and then decays with an intrinsic energy defined by a nn-scattering length of a_s = −18.7 fm [49]. Lastly, a decay model was created based on the θ_{nn} angular distribution from the full three-body calculations of Hagino and Sagawa (Fig. 3 of Ref. [34]). Examples of the input cos(θ_k) distributions in the Y Jacobi system are shown in Fig. 3 for a 5 keV resonance energy. As shown, the flat distribution is produced by the phase-space model indicating no correlations between the neutrons, whereas the dineutron and Hagino models produces distributions that are strongly peaked at −1 and 1 indicating the neutrons are emitted with opening angles near 0^∘ and 180^∘, respectively. It is important to clarify that the dineutron decay model simulates the emission of a dineutron and does not necessitate the presence of a dineutron in the ground-state wavefunction of^{26}O. In comparison, the correlations from Hagino and Sagawa are derived from a full three-body decay calculations which contain a dineutron configuration in the ground-state structure of^{26}O.

FIG. 3. (Color online) Input cos(θ_k) distributions from the Y Jacobi coordinate system for the Monte Carlo simulations. The distributions from the phase-space, dineutron, and Hagino decay models are presented.

The effects of a finite lifetime for^{26}O were also included in the Monte Carlo simulation. As described in Ref. [32], a finite lifetime of^{26}O, in the range of picoseconds, will result in decreased velocity distributions of the two neutrons emitted after the^{26}O has traversed through part of the target. The decreased neutron velocity is represented in the relative velocity spectrum, V_{rel}, defined as the difference in velocity between the neutron and the 24O fragment [Fig. 1(d)].

IV. RESULTS AND DISCUSSION

The results from the simulations with the three different decay modes were simultaneously fit to the experimental decay energy, relative velocity, and Jacobi plots in Fig. 1. The ground-state resonance energy was a free parameter varying from 0 keV to 100 keV in the fit. The width of the decay, Γ, was fixed at 1 keV since the width of the resonance is completely dominated by the experimental resolutions [23, 32]. The influence of the^{26}O lifetime was also investigated with t_{1/2} = 0 ps and 4 ps. The best fit (shown in Fig. 1) of the phase-space, dineutron, and Hagino decay modes corresponds to E_r = 15 keV, 15 keV, and 10 keV, respectively, with t_{1/2} = 4 ps.

The experimental results were well reproduced by all of the models indicating that the angular-energy correlations are relatively insensitive to the decay mode. This is unexpected as previous works have shown E_x/E_T from the T system and cos(θ_k) from the Y system to be particularly sensitive to the decay mode [21, 22, 35]. For example, the input cos(θ_k) distribution should be strongly peaked at −1 for the dineutron decay, relatively flat for the phase-space decay, and peaked near 1 for the Hagino decay, as shown in Fig. 3. However, all simulations show the same correlation signatures when passed through the experimental filter.

The insensitivity of the results to the decay mode is due to the uncertainty in the momentum of the^{24}O at

FIG. 4. (Color online) cos(θ_k) distributions from the Y Jacobi system for simulations using the Hagino decay mode with varying Be target thicknesses and decay energies for^{26}O. The results are shown (a) with and (b) without the inclusion of the experimental incoming beam characteristics in the simulations.

the reaction point in the target and the near threshold energy of the^{26}O ground-state resonance. The Jacobi variables, which describe the three-body correlations, are directly related to the relative momenta of the particles in the decay. When the decay energy is very low, the relative momentum between the particles is then very small. Thus, a small uncertainty in the momentum of the^{24}O fragment can cause a large change in the relative momentum between the neutrons and fragment. This produces a false enhancement in the correlation between the two neutrons relative to the^{24}O fragment which is manifested as the observed dineutron signatures shown in panels (b) and (f) of Fig. 1. This effect is diminished with increasing decay energy. For example, in Fig. 4(a) the the cos(θ_k) distribution is shown for a resonance energy of 200 keV with the Hagino decay model (black dash-dot line). With the 200 keV resonance energy, the angular distribution peaks at cos(θ_k) = 1 reproducing the overall feature of the input distribution from Hagino.

The uncertainty in the momentum of the^{24}O stems mainly from two factors: (1) the uncertainty in the position at which the^{27}F(−p) reaction occurs within the target and (2) the size and angular spread of the incoming beam. While the momentum, or Bρ, of the outgoing 24O is defined by the path of the fragment through the

Sweeper magnet, the momentum at the reaction point requires the location of the reaction in the target to be known so that the energy-loss within the target can be accurately calculated. Since the reaction location is unknown, it was assumed that the reaction took place at the mid-point of the target in the present analysis. In Fig. 4(a), the effect of the target thickness is shown. For a 200 keV resonance, decreasing the target thickness from 705 mg/cm^2 to 0.5 mg/cm^2 improves the agreement between the results of the simulation and the input Hagino distribution. However, decreasing the target thickness does not improve the results when E_r = 5 keV and the dineutron signature still prevails. This is due to the characteristics of the incoming^{27}F beam which can produce uncertainties in the Bρ analysis of the^{24}O through the Sweeper magnet. Again, if the decay energy of^{26}O is near threshold any uncertainty in the^{24}O momentum is magnified in the three-body correlations. From the experiment, the beam spot on the target was estimated to be 5 mm x 5 mm and the incoming angular distribution of the beam was approximated as a Gaussian distribution with a mean of 0^∘ and σ = 7 mrad (2 mrad) in the dispersive (non-dispersive) direction. These deviations from an ideal beam could be corrected event-by-event using tracking detectors upstream of the target, however such detectors were not available for the present experiment.

Fig. 4(b) shows the expected angular distributions assuming ideal beam characteristics. While the simulations with the 200 keV resonance energy are not significantly altered with the ideal beam characteristics, the dineutron signature is no longer present in the simulation with a 5 keV resonance energy. A relatively flat cos(θ_k) distribution is observed with a 125 mg/cm^2 target and a slight peaking towards cos(θ_k) = 1 is shown with a 0.5 mg/cm^2 target with E_r = 5 keV. The results from the simulation, therefore, indicate that an experimental measurement sensitive to the angular and energy correlations in the three body decay of^{26}O will be extremely difficult assuming the ground state resonance is near threshold. Even with an increased^{27}F beam rate, the use of a 0.5 mg/cm^2 target would pose a significant challenge in obtaining the required statistics to identify the decay mode of^{26}O. While future experiments will likely encounter a similar situation, it is important to emphasis that these results and sensitivity studies are specific to the present experiment and MoNA-Sweeper setup.

V. CONSTRAINTS ON THE^{26}O GROUND-STATE RESONANCE ENERGY

Although not sensitive to the decay mode, the measured three-body correlations are sensitive to the^{26}O decay energy and, therefore, can allow for improved constraints to be extracted through a self-consistent fit of all the spectra presented in Fig. 1. As mentioned previously, the width of the resonance was kept constant, Γ = 1 keV. The fitting procedure was completed for t_{1/2} = 0 ps and

FIG. 5. (Color online) Reduced chi-squared as a function of 26O ground-state decay energy for (a) t_{1/2} = 0 ps and (b) 4 ps with the three different decay modes used in the simulation.

TABLE I. 1σ limits on the^{26}O ground-state resonance energy extracted from the simultaneous fitting of the three-body correlations and decay energy spectrum with different decay modes in the simulation. 1σ limit Model t_{1/2} = 0 ps t_{1/2} = 4 ps Hagino < 15 keV < 31 keV Phase-Space < 33 keV < 53 keV Dineutron 6 − 42 keV 6 − 53 keV

4 ps to examine the half-life dependence of the results. Since the V_{rel} distribution [Fig. 1(d)] has been shown to be best fit with t_{1/2} ∼ 4 ps [32], it was not included in the fitting procedure with t_{1/2} = 0 ps.

The results of the simultaneous fitting procedure for t_{1/2} = 0 ps and 4 ps are presented in Fig. 5 where the reduced chi-squared value (χ^2_{red}) from each fit is shown as a function of the^{26}O resonance energy for the three simulated decay modes. In all cases, it is clear that the inclusion of the three-body correlations into the fit greatly enhances the sensitivity of the results to the decay energy relative to our previous work where a constraint of E_{decay} < 200 keV was extracted using only the decay energy spectrum [23]. The strong correlations present in the input distributions of the Hagino and dineutron decay models (Fig. 3) produce a strong sensitivity of the results at high and low decay energies, respectively. At low decay energies, the correlation between the emitted neutrons are severely overestimated by the dineutron decay resulting in the large χ^2_{red}. Similarly, as the decay energy increases the correlations from the Hagino decay, with cos(θ_k) peaking near 1, become more prominent producing a rapid increase in χ^2_{red}. The phase-space decay is the least sensitive to the decay energy since it does not exhibit such strong features in the correlations.

For all three models, the χ^2_{red} rises with the decay energy increasing beyond ∼20 keV due to the poor fitting of the three-body correlations. From the chi-squared fits, the 1σ limits for the ground-state^{26}O resonance energy were extracted and are shown in Table I. The results strongly support the conclusion that the ground-state resonance energy is near threshold, with upper-limits ranging from 15 keV to 50 keV depending on the decay mode and half-life. The extracted 1σ limits are in excellent agreement with the 40 keV upper-limit reported by the R3B collaboration [24]. It is worth noting that the results using the correlations from the full three-body calculations of Hagino and Sagawa [34] (which also agree with the detailed calculations of Grigorenko et al. [17]) should provide the most realistic model for the decay and produces 1σ upper-limits of 15 keV and 31 keV for the cases of t_{1/2} = 0 ps and 4 ps, respectively.

VI. CONCLUSIONS

The three-body energy and angular correlations in the ground-state resonance decay of^{26}O→^{24}O + n + n were experimentally measured using the MoNA-Sweeper setup. The experimental results were compared to Monte Carlo simulations using three different decay models: a phase-space model, dineutron model, and three-body decay model based on the theoretical calculations of Hagino and Sagawa [34]. The experimental three-body correlations were well reproduced by all three of the decay models indicating an insensitivity of the experimental data to the decay mode. This was shown to be due to the low decay energy of^{26}O which, therefore, requires very precise measurements of the relative momentum of the

24O and two neutrons to reconstruct the correlations. Monte Carlo simulations showed that the target thickness and tracking of the incoming beam characteristics largely define the experimental resolutions for measuring the three-body correlations. Even with improving these aspects of the experiment, the simulation results indicate that future attempts to measure the three-body correlations from the decay of^{26}O will face a difficult challenge due to the near threshold ground-state resonance energy.

Through simultaneous and self-consistent fitting of the decay energy spectrum and the Jacobi three-body correlation variables strict constraints on the^{26}O decay energy were extracted. While the results were dependent on the decay mode and half-life of^{26}O, a maximum 1σ upper-limit of 53 keV was obtained. Furthermore, if one assumes that the correlations from the full three-body decay calculations of Hagino and Sagawa [34] are correct (noting that similar correlations are also predicted by Grigorenko et al. [17]), then the 1σ upper-limit for the 26O ground-state is 31 keV. Additional measurements, requiring increased statistics, are strongly desired to provide a precise measurement ground-state resonance energy for^{26}O.

ACKNOWLEDGMENTS

We would like to thank Anthony Kuchera (NSCL) and Paul Gueye (Hampton University) for proof reading the manuscript. The authors gratefully acknowledge the support of the NSCL operations staff for providing a high quality beam. This work is supported by the National Science Foundation under Grant No. PHY-1102511 and PHY-1306074.

[1] M. Thoennessen, Rep. Prog. Phys. 67, 1187 (2004). [2] M. Thoennessen and B. Sherrill, Nature 473, 25 (2011). [3] J. Erler, N. Birge, M. Kortelainen, W. Nazarewicz, E. Olsen, A. M. Perhac, and M. Stoitsov, Nature 486, 509 (2012).

[4] T. Baumann et al., Nature 449, 1022 (2007). [5] T. Baumann, A. Spyrou, and M. Thoennessen, Rep.

Prog. Phys. 75, 036301 (2012).

[6] T. Aumann and H. Simon, Nuclear Physics News 24, 5 (2014).

[7] M. Pfutzner, M. Karny, L. V. Grigorenko, and K. Riisager, Rev. Mod. Phys. 84, 567 (2012).

[8] K. Miernik et al., Phys. Rev. Lett. 99, 192501 (2007). [9] L. V. Grigorenko et al., Phys. Rev. C 80, 034602 (2009). [10] I. A. Egorova et al., Phys. Rev. Lett. 109, 202502 (2012). [11] L. V. Grigorenko, I. A. Egorova, R. J. Charity, and M. V.

Zhukov, Phys. Rev. C 86, 061602(R) (2012). [12] H. T. Johansson et al., Nucl. Phys. A 847, 66 (2010). [13] Y. Kikuchi, T. Matsumoto, K. Minomo, and K. Ogata, Phys. Rev. C 88, 021602(R) (2013).

[14] Y. Aksyutina et al., Phys. Rev. Lett. 111, 242501 (2013). [15] V. I. Goldansky, Nucl. Phys. 19, 482 (1960). [16] L. V. Grigorenko et al., Phys. Lett. B 677, 30 (2009).

[17] L. V. Grigorenko, I. G. Mukha, and M. V. Zhukov, Phys.

Rev. Lett. 111, 042501 (2013).

[18] M. S. Golovkov et al., Phys. Rev. C 72, 064612 (2005). [19] S. I. Sidorchuk et al., Phys. Rev. Lett. 108, 202502 (2012).

[20] J. Smith et al., Submitted for publication (2014). [21] Z. Kohley, E. Lunderberg, P. A. DeYoung, A. Volya, T. Baumann, D. Bazin, G. Christian, N. L. Cooper, N. Frank, A. Gade, C. Hall, J. Hinnefeld, B. Luther, S. Mosby, W. A. Peters, J. K. Smith, J. Snyder, A. Spyrou, and M. Thoennessen, Phys. Rev. C 87, 011304(R) (2013).

[22] A. Spyrou, Z. Kohley, T. Baumann, D. Bazin, B. A.

Brown, G. Chrstian, P. A. DeYoung, J. E. Finck, N. Frank, E. Lunderberg, S. Mosby, W. A. Peters, A. Schiller, J. K. Smith, J. Synder, M. J. Strongman, M. Thoennessen, and A. Volya, Phys. Rev. Lett. 108, 102501 (2012).

[23] E. Lunderberg, P. A. DeYoung, Z. Kohley, H. Attanayake, T. Baumann, D. Bazin, G. Christian, D. Divaratne, S. M. Grimes, A. Haagsma, J. E. Finck, N. Frank, et al., Phys. Rev. Lett. 108, 142503 (2012).

[24] C. Caesar et al., Phys. Rev. C 88, 034313 (2013).

[25] C. R. Hoffman et al., Phys. Rev. Lett. 100, 152502 (2008).

[26] G. Hagen, M. Hjorth-Jensen, G. R. Jansen, R. Machleidt, and T. Papenbrock, Phys. Rev. Lett. 108, 242501 (2012).

[27] S. K. Bogner et al., Phys. Rev. Lett. 113, 142501 (2014). [28] H. Hergert, S. Binder, A. Calci, J. Langhammer, and R. Roth, Phys. Rev. Lett. 110, 242501 (2013).

[29] A. Cipollone, C. Barbieri, and P. Navratil, Phys. Rev.

Lett. 111, 062501 (2013).

[30] L. V. Grigorenko, I. G. Mukha, C. Scheidenberger, and M. V. Zhukov, Phys. Rev. C 84, 021303(R) (2011).

[31] M. Thoennessen et al., Nucl. Instrum. Meth. A 729, 207 (2013).

[32] Z. Kohley et al., Phys. Rev. Lett. 110, 152501 (2013). [33] A. Volya and V. Zelevinsky, Phys. Atom. Nucl. 77, 969 (2014).

[34] K. Hagino and H. Sagawa, Phys. Rev. C 89, 014331 (2014).

[35] Z. Kohley et al., J. Phys. Conf. Ser. 569, 012033 (2014). [36] M. D. Bird, S. J. Kenney, J. Toth, H. W. Weijers, J. C.

DeKamp, M. Thoennessen, and A. F. Zeller, IEEE Trans. Appl. Supercond. 15, 1252 (2005).

[37] B. Luther, T. Baumann, M. Thoennessen, J. Brown, P. DeYoung, J. Finck, J. Hinnefeld, R. Howes, K. Kemper, P. Pancella, G. Peaslee, W. Rogers, and S. Tabor, Nucl. Instrum. Meth. A 505, 33 (2003).

[38] T. Baumann et al., Nucl. Instrum. Meth. A 543, 517 (2005).

[39] N. Frank, A. Schiller, D. Bazin, W. A. Peters, and

M. Thoennessen, Nucl. Instrum. Meth. Phys. Res. A 580, 1478 (2007).

[40] G. Christian et al., Phys. Rev. C 85, 034327 (2012). [41] K. Hagino and H. Sagawa, Phys. Rev. C 90, 027303 (2014).

[42] Z. Kohley, E. Lunderberg, P. A. DeYoung, B. T. Roeder, T. Baumann, G. Christian, S. Mosby, J. K. Smith, J. Snyder, A. Spyrou, and M. Thoennessen, Nucl. Instrum. Meth. Phys. Res. A 682, 59 (2012).

[43] S. Agostinelli, J. Allision, K. Amako, J. Apostolakis, H. Araujo, P. Arce, M. Asai, D. Axen, S. Banerjee, G. Barrand, F. Behner, L. Bellagamba, J. Boudreau, et al., Nucl. Instrum. Meth. A 506, 250 (2003).

[44] J. Allision, K. Amako, J. Apostolakis, H. Araujo, P. A.

Dubios, M. Asai, G. Barrand, R. Capra, S. Chauvie, R. Chytracek, G. A. P. Cirrone, G. Cooperman, et al., IEEE T. Nucl. Sci. 53, 270 (2006).

[45] B. Roeder, “Development and validation of neutron detection simulations for EURISOL,” EURISOL Design Study, Report: [10-25-2008-006-In-beamvalidations.pdf, pp 31-44] (2008), www.eurisol.org/site02/physics and instrumentation/.

[46] F. James, CERN, Yellow Report No. 68-15 (1968). [47] R. Brun and F. Rademakers, Nucl. Instrum. Meth. A 389, 81 (1997), see also http://root.cern.ch/html/TGenPhaseSpace.html.

[48] A. Volya and V. Zelevinsky, Phys. Rev. C 74, 064314 (2006).

[49] D. E. G. Trotter et al., Phys. Rev. Lett. 83, 3788 (1999).