arXiv:1601.00201v1 [astro-ph.GA] 2 Jan 2016

DRAFT VERSION MAY 6, 2019 Preprint typeset using L^ATEX style emulateapj v. 5/2/11

A DEEPER LOOK AT FAINT Hα EMISSION IN NEARBY DWARF GALAXIES

JANICE C. LEE^{1,2} , SYLVAIN VEILLEUX^3, MICHAEL MCDONALD^4 , BRYAN HILBERT^1 Draft version May 6, 2019

ABSTRACT We present deep Hα imaging of three nearby dwarf galaxies, carefully selected to optimize observations with the Maryland-Magellan Tunable Filter (MMTF) on the Magellan 6.5m telescope. An effective bandpass of ∼13Å is used, and the images reach 3σ flux limits of ∼8×10^{−18} ergs s^{−1} cm^{−2}, which is about an order of magnitude lower than standard narrowband observations obtained by the most recent generation of local Hα galaxy surveys. The observations were originally motivated by the finding that the Hα/FUV flux ratio of galaxies systematically declines as global galactic properties such as the star formation rate and stellar mass decrease. The three dwarf galaxies selected for study have star formation rates, that when calculated from their Hα luminosities using standard conversion recipes, are ∼50% of those based on the FUV. Follow-up studies of many of the potential causes for the trends in the Hα/FUV flux ratio have been performed, but the possibility that previous observations have missed a non-negligible fraction of faint ionized emission in dwarf galaxies has not been investigated. The MMTF observations reveal both diffuse and structured Hα emission (filaments, shells, possible single-star HII regions) spanning extents up to 2.5 times larger relative to previous observations. However, only up to an additional ∼ 5% of Hα flux is captured, which does not account for the trends in the Hα/FUV ratio. Beyond investigation of the Hα/FUV ratio, the impact of the newly detected extended flux on our understanding of star formation, the properties of HII regions, and the propagation of ionizing photons warrant further investigation.

Subject headings: galaxies: dwarf — galaxies: ISM — galaxies: star formation — galaxies: individual (UGC 5456, IC 559; CGCG 035-007

1. INTRODUCTION

Observations of the diffuse (warm) ionized gas in galaxies have been essential for advancing our understanding of star formation feedback processes, and the structure and phase balance of the ISM. The DIG (or warm ionized medium – WIM) is commonly studied with observations of the Hα emission-line. From the first detection of the Galactic “Reynolds Layer" (Reynolds 1971; Reynolds et al. 1984), to the discovery of DIG in the haloes of edge-on galaxies and throughout galaxy disks, intricate geometries of loops, shells, filaments and chimneys – the fossil remnants of past deposition of radiative and mechanical energy into the ISM by massive stars and stellar death – have been found (e.g., Dettmar 1990; Rand et al., 1990; Monnett 1971; Hunter & Gallagher 1990; Ferguson et al. 1998; Haffner et al. 2009 and references therein). The contribution of the DIG, whether in such structures or in an unresolved or genuinely diffuse component, to the total Hα luminosity of galaxies is substantial. On average, about half of the integrated Hα emission is measured outside discrete HII regions (e.g., van Zee 2000; Oey et al. 2007, and references therein).

Here, we present the results of deep Hα imaging observations designed to significantly surpass the flux limits that characterize the most recent generation of local Hα galaxy surveys (e.g., Meurer et al. 2006; Kennicutt et al. 2008, Gavazzi et al. 2012; Boselli et al. 2015), and past studies which have played a major role in shaping our view of the DIG in nearby galaxies. Our objective was to perform a

1 Space Telescope Science Institute, Baltimore, MD; jlee@stsci.edu 2 Visiting Astronomer, SSC/IPAC, Caltech, Pasadena, CA 3 Department of Astronomy and Joint Space-Science Institute, University of Maryland, College Park, MD 4 MIT Kavli Institute for Astrophysics and Space Research, Cambridge, MA

simple detection experiment for faint Hα in the outskirts of dwarf galaxies. The observations were originally motivated by the finding that the Hα/FUV flux ratio of galaxies systematically declines as global galactic properties such as the star formation rate (SFR) and stellar mass decrease (e.g., Boselli et al. 2009; Meurer et al. 2009; Hunter et al. 2010; Lee et al 2009; 2011a, b and references therein). The behavior of the Hα/FUV ratio was studied over five orders of magnitudes in SFR to ∼10^{−4} M_⊙ yr^{−1} by Lee et al. (2009). Above SFR∼0.1 M_⊙ yr^{−1}, the average ratio is constant, but was found to be lower by a factor of two at ∼10^{−3} M_⊙ yr^{−1}, and by an order of magnitude at ∼10^{−4} M_⊙ yr^{−1}. Possible causes include bursty or otherwise non-constant star formation histories, variations in the stellar initial mass function (IMF) for massive stars, stochastic sampling of the massive star IMF, undetected Hα diffuse emission, and the escape of ionizing photons into the intergalactic medium. The behavior of the ratio is likely due to a combination of effects, and subsequent work has investigated the possibilities in further detail to attempt to explain the behavior of the Hα/UV ratio in dwarf galaxies as well as of the low surface brightness outer disks of spiral galaxies (e.g., Fumagalli et al. 2011; Weisz et al. 2012; Eldridge et al. 2012; Relano et al. 2012; Weidner et al. 2013; da Silva et al. 2014). Here, we report on our effort to examine the topic that has not been as well-studied as the others: that the low gas density environments typical of dwarf galaxies might allow ionizing photons to travel far from their parent HII regions, and result in diffuse Hα emission that falls beneath the detection thresholds of typical narrowband observations of nearby galaxies.

To perform this experiment, we have used the Maryland- Magellan Tunable Filter (MMTF; Veilleux et al. 2010) with the Inamori Magellan Areal Camera and Spectrograph (IMACS; Dressler et al. 2006), and improve upon major observational parameters which affect the flux sensitivity by factors of at least a few. The Hα galaxy surveys on which the UV/Hα studies have been based have typically used ∼2 meter class telescopes, R∼100 narrowband (NB) filters (∼70Å), and NB exposure times of ∼20 minutes. With our MMTF observations, we gain the 6.5m aperture of the Magellan- Baade telescope, employ an effective bandpass of ∼13Å, and lengthen the narrowband integration to ∼3 hours. The resulting Hα images reach flux limits which are 8-9 lower than previous imaging. Further, this work also addresses potentially large uncertainties in continuum subtraction that can particularly affect dwarf galaxies. To estimate the stellar continuum flux density, the standard approach is to scale a continuum image (which is often taken in a broadband R filter for efficiency) to match the average continuum level of the galaxy in the narrowband image. The scaling is calibrated using pure continuum sources (e.g., foreground stars, and areas within the target galaxy that are thought to be continuum dominated). However, uncertainties (20-60%; Oey et al. 2007; Kennicutt et al. 2008) arise from differences in the continuum slope between the target galaxies (dwarf galaxies are among the bluest known locally) and the calibrating sources, and may lead to over-subtraction of the DIG. Our work with the MMTF essentially removes these uncertainties since the continuum image is taken at a wavelength close to Hα with the same narrow bandpass used for the on-line image; moreover, the contribution of the continuum is small due to the narrowness of the bandpass. Further details on the observations and sample selection are given in § 2, while the data reduction is summarized in § 3. The results of the MMTF observations are presented in § 4, and summarized in § 5.

2. OBSERVATIONS

The nearby dwarf galaxies CGCG035-007, IC559, and UGC5456 were selected for observation from the 11 Mpc Hα UV Galaxy and Spitzer Local Volume Surveys (11HUGS/LVL; Kennicutt et al. 2008; Lee et al. 2009; Dale et al. 2009; Lee et al. 2011; Cook et al. 2014). The galaxies were chosen to:

1. exhibit low Hα-to-FUV ratios (∼0.5 when Hα and FUV are converted to extinction-corrected SFRs using the relationships in Kennicutt 1998; see Lee et al. 2009),

2. have blue UV colors (FUV-NUV<0.4) to ensure that the low Hα-to-FUV ratios are not primarily due to excess UV emission from old stellar populations (i.e., UV “upturn”),

3. have small angular extents (∼2^′) to fit within the monochromatic spot on a single IMACS detector for the chosen etalon plate spacing (see Section 3),

4. span a range of disk inclinations, to enable study of faint Hα emission both external to and within the disk plane,

5. have a minimum of bright foreground stars within a 7^′ radius to minimize potential ghosting effects (section 4.3.2, Veilleux et al. 2010), and

6. be observable in the southern sky in the first half of the year.

Salient properties of the galaxies are summarized in Table 1. Figure 1 shows the locations of the three galaxies on a plot comparing Hα and FUV luminosities (extinction corrected) of the 11HUGS/LVL sample as in Lee et al. (2009).

Observations were conducted between 2010 March 11-15. New moon occurred on the night of March 15. Observing conditions were photometric through the run. The seeing was generally quite good (0.^{′′}6-0.^{′′}7), though there were increases up to ∼1.^{′′}2 on the later halves of the first two nights.

The MMTF uses a low-order Fabry-Perot etalon and is mounted in the IMACS f/2 camera, which has an 8K × 8K mosaic CCD with a pixel scale of 0.^{′′}2. The observations are taken in "staring mode," where the etalon gap is fixed, resulting in a single narrowband image at each point in the field. However, the central wavelength of the resultant narrowband slowly varies with distance from the optical axis. The selected etalon plate spacing (Z_{coarse} = +1) yields a 4.8^′diameter fieldof-view over which the central wavelength of the bandpass does not change by more than 3 Å. The bandpass FWHM is 8.1 Å, and the profile shape is well characterized by a Lorentzian function, which has an effective bandpass (the integral of the profile divided by its peak) of Π/2 × 8.1 Å (12.7 Å). The etalon was tuned to capture redshifted Hα emission at the recessional velocities of the galaxies. Continuum images, both to the blue and to the red of Hα, were obtained with the MMTF using the same etalon parameters as the Hα observations, as well as with medium-band filters that do not contain strong emission lines (MMTF6399-206 and MMTF7045- 228). The drift of the central wavelength of the MMTF bandpass was minimized by taking the observations at a constant gravity angle, and by re-calibrating the etalon approximately every hour. As a result, the field gradually rotates on the detector plane over the span of the night. The etalon was tuned immediately prior to most Hα exposures, with the result that the central wavelength was held constant to within ±0.3Å. Continuum exposures followed most Hα exposures, but were taken without re-calibrating, so the drift of the central wavelength is somewhat higher, but still within ±1Å. Observations of spectrophotometric standard stars from Massey et al. (1988) were taken at the beginning and end of each night.

As summarized in Table 2, total exposure times per object were ∼ 3 hours through the MMTF Hα bandpass, ∼40 minutes through each of MMTF continuum bandpasses, and at least 10 minutes in each of the medium-band filters.

3. REDUCTION

Bias subtraction, flat fielding, and sky subtraction were performed using version 1.4 of the MMTF data reduction pipeline^5, with modifications to mitigate source contamination of the overscan region, and to improve the sky determination via source masking.

Subtraction of the stellar continuum from the Hα images was performed as follows. To minimize the impact of the subtraction on the overall depth of the imaging, medium-band images which bracket the MMTF Hα observations were used. The factors needed to scale the medium-band images to the level of the continuum in the Hα observations were found from the flux ratios of unsaturated, well-exposed stars in common between each pair of MMTF continuum and mediumband images. As a check, the ratios of the responses (com-

5 available at http://www.astro.umd.edu/∼veilleux/mmtf/datared.html

puted from the standard star observations) for the mediumband and MMTF Hα images were also calculated. The values agree to 5%. The scaled medium-band images were then combined and subtracted from the stacked Hα image. This process however, does not correct for underlying stellar Hα absorption, which is typically ∼2Å in equivalent width. Thus, the integrated fluxes reported at the bottom of Table 1 are formally lower limits, but iterative subtraction of progressively fainter continuum images show that the Hα fluxes do not increase by more than a few percent before the images appear to be clearly under-subtracted.

4. RESULTS

The results of the MMTF observations are first compared with previous Hα imaging in Figures 1, 2, and 3. A 2×3 panel figure is shown for each dwarf galaxy. In each figure, the first two rows show the same pair of Hα images: one from the 11HUGS/LVL survey on the left, and the deeper MMTF image on the right. The top pair of images are shown on a logarithmic scale and are stretched to highlight bright HII regions in the inner disk, while the middle pair of images are shown on a linear scale and are stretched to emphasize faint emission and extended DIG. Contours are chosen to complement the stretch of the images, so that structures over a full range of surface brightnesses can be examined in each individual panel. Contours at 1 and 3σ of the background outline the full extent of detectable emission in the top pair of images, while 10, 30, and 100σ contours are drawn on the inner regions in the middle pair of images. Whereas the 1σ contours correspond to 3-4 ×10^{−17} ergs s^{−1} cm^{−2} arcsec^{−2} in the 11HUGS/LVL images, they reach 8-9 times deeper in the MMTF observations, to 4-5 ×10^{−18} ergs s^{−1} cm^{−2} arcsec^{−2}. Thus, the shape of the 1σ 11HUGS/LVL contours is similar to the 10σ MMTF contours for each galaxy. The bottom two panels in each figure show the MMTF contours again, but overlaid on the medium-band image used for continuum subtraction to illustrate the morphology of the Hα emission relative to the stellar disk.

It is immediately clear that the MMTF observations reveal Hα emission that is far more extended and finely structured than previously seen in the 11HUGS/LVL data. The nature of the faint emission detected with the MMTF depends on the inclination of the disk – on whether Hα is observed external to the disk plane or in the outer periphery of the disk. We first describe notable morphological features of the emission, and then discuss the measurement and comparison of the fluxes from the 11HUGS/LVL and MMTF images.

4.1. Morphology of the Hα Emission

UGC5456 (Figure 1) is highly inclined (i = 80^∘; Makarov et al. 2014), and DIG is detected ∼2.5 times further beyond the disk mid-plane relative to the 11HUGS/LVL image. The DIG is more extended to the northeast, rising to 0.^′9 above the midplane, and to 0.^′6 to the southwest. These angular distances correspond to 1 kpc and 0.7 kpc respectively for the 11HUGS/LVL adopted distance of 3.8 Mpc (Kennicutt 2008). If a more recent TRGB distance of 10.5 Mpc from the Extragalactic Distance Database^6 is used, the physical extents would scale accordingly by a factor of 2.8. The emission in the northeast may extend to the edge of the high signal-to-noise region of the MMTF image, which coincides with the

6 http://edd.ifa.hawaii.edu/

top of the image (Figure 2, middle right); the potential emission is not captured by the 1σ contours due to the 4 pixel smoothing, but clearly may only be noise. The higher resolution of the MMTF image (PSF FWHM of 0.^{′′}7 relative to 1.^{′′}2; corresponding to 13 and 22 pc at 3.8 Mpc) shows that the faint Hα emission is highly structured, with well-defined loops and filaments surrounding the bright HII regions (Figure 1, top right). Similar but more diffuse structures are also evident in the galaxy halo, and numerous chimney-like spokes, possibly highlighting low column density pathways for Lyman continuum photon propagation into the halo (e.g., Zastrow et al. 2011, 2013), can be identified just beyond the 10σ contour (Figure 2, middle right). At the southern tip of the galaxy, an additional low surface brightness HII region is detected (Figure 2, middle right), and a single irregular region in the 11HUGS/LVL image is clearly resolved into 7 objects. The observed (i.e., no extinction corrections applied) Hα luminosity of these regions range from 5×10^{35} ergs s^{−1} to 2×10^{36} ergs s^{−1}, which corresponds to the ionizing fluxes of single B0V-O9V stars (Smith et al. 2002), assuming Case B recombination and that the HII regions are radiation bounded. If the galaxy is instead at 10.5 Mpc, the Hα luminosities would instead map to more massive stars in the O8V-O7V range.

In contrast, IC559 (Figure 2) is the least inclined of the three galaxies in our sample (i = 35^∘), and although the MMTF image again reveals loops and filaments in the immediate vicinity of the bright HII regions (Figure 2, top), the extraplanar DIG found in UGC5456 is not seen. Rather, the newly detected Hα, which is twice as extended relative to previous observations, takes the form of many faint HII regions which surround the periphery of the 10σ (1σ) contour of the MMTF (11HUGS/LVL) image (Figure 2, middle). The regions are even less luminous than those in UGC5456 (assuming a distance of 4.9 Mpc; Kennicutt 2008). Their Hα luminosities range from 8×10^{34} ergs s^{−1} to 5×10^{35} ergs s^{−1}; the low end of this range corresponds to the ionizing flux of a single B0.5V star (Smith et al. 2002).

Finally, CGCG035-007 (Figure 3) is at an inclination intermediate between the two previous galaxies (i = 50^∘). The new faint emission and structures detected in the MMTF image are similar in nature to that in IC559, although the loops and filaments surrounding the HII regions are not as prominent. Within the 3σ contours of the 11HUGS/LVL image, at least 20 well-defined point-like regions can now be identified (Figure 3, top), and have Hα luminosities in the range of the those found at the edges of the Hα emission in IC559. Additional faint HII regions can also seen outside the 10σ contour of the MMTF image (Figure 3, middle) mostly on the western side of the galaxy.

4.2. Comparison of Fluxes

Despite the much larger extent of the faint Hα emission uncovered in the MMTF observations, its contribution to the integrated flux is small, as might be expected. It is straightforward to compute the fractional contribution using relative measurements in two elliptical apertures: a smaller aperture used to measure the total flux in the 11HUGS/LVL images, and a larger one that also covers the more extended emission found in the MMTF data. These apertures are shown in the top panels in each figure, and the corresponding measurements, along with the percent difference are given in Table 1. Measurements of 11HUGS/LVL Hα images with the larger apertures do show 1-6% greater flux compared to those with the smaller apertures, but this difference is insignificant given the 1σ uncertainties (12-18%). Analogous measurements on the MMTF images yield 3-7% greater flux detected at the 1σ level in the outer regions (uncertainties are 4%).

The fluxes measured with the same aperture on the 11HUGS/LVL and MMTF datasets can also be crosscompared. However, such a comparison is less straightforward since the 11HUGS/LVL imaging includes flux from the [NII]λλ6548,84 lines, and is subject to uncertainties in its removal. The comparison would also be affected by potential systematic offsets in the zeropoint scales, which is not captured in the reported errors.

Regarding the [NII] lines, in Kennicutt et al. (2008) the [NII]λλ6548,84 emission was estimated to be 3-5% of the Hα flux based on an empirical scaling relationship with the blue absolute magnitude of the galaxy. However, spectroscopic measurements taken through a 3^{′′} fiber are available from SDSS DR12. The SDSS spectra yield slightly higher [NII]λλ6548,84/Hα ratios: 0.08, 0.07, and 0.12 for UGC5456, IC559 and CGCG035-007. In Table 1, both the observed Hα+[NII] flux from 11HUGS/LVL and an [NII]- corrected flux (based on the SDSS spectroscopy) are given.

Comparison of the 11HUGS/LVL and MMTF Hα photometry measured in the smaller (larger) apertures for each of the galaxies shows that the fluxes are within 2-7% (5-7%) of each other, and within the uncertainties. However, the MMTF fluxes of all three galaxies are all higher. Thus, systematic offsets due to the calibration of the zeropoint and continuum subtraction of the 11HUGS/LVL data are limited to this level.

5. DISCUSSION AND CONCLUSIONS

We have obtained deep MMTF Hα observations of three nearby dwarf galaxies with a range of inclination angles to examine the possibility that previous standard narrowband observations may have missed a component of the integrated Hα flux hidden in extended low surface brightness DIG. The MMTF observations reach 3σ flux limits of ∼8×10^{−18} ergs s^{−1} cm^{−2}, which is about an order of magnitude lower than standard narrowband observations obtained by the most recent generation of local Hα galaxy surveys. If the three galaxies studied here are representative of the broader nearby dwarf galaxy population, then the published integrated Hα fluxes from such surveys should not underestimate the total flux by more than ∼5%.

The initial motivation for this work was to investigate a potential cause of the systematically low values of the Hα/UV flux in dwarf galaxies. The value of SFR(Hα)/SFR(FUV) for CGCG035-007, IC559, and UGC5456 are 0.53, 0.52, and 0.74^7, respectively. The new measurements based on the MMTF Hα imaging do not change these values significantly.

Thus, unaccounted Hα flux in a faint extended component surrounding dwarf galaxies is not likely a cause of the trends in the Hα/UV ratio. However, there are many galaxies with Hα/FUV ratios lower than those studied here (Figure 1). It may be worth checking this conclusion on a few such objects, although stochastic sampling of the stellar initial mass function combined with non-constant star formation may be able to explain most of the trend (Fumagalli et al. 2011; da Silva et al. 2014; Krumholz et al. 2015).

Beyond examination of the Hα/UV ratio, the MMTF observations have revealed a wealth of structure in newly detected diffuse emission many scale heights above the disk plane (UGC 5456; Figure 1), as well as numerous faint, possibly single-star HII regions within the plane that warrant further investigation (IC559, CGCG035-007; Figure 2 and 3). Study of the properties of the faintest HII regions, coupled with parsec-resolution multi-wavelength UV-optical imaging from HST (e.g., Legacy ExtraGalactic Ultraviolet Survey, LEGUS; Calzetti et al. 2014) will provide insight into the ages and masses of the ionizing sources. In particular, HST imaging is available for IC559 from LEGUS, which show single point sources within the faint HII regions in the outskirts of the galaxy. Such a study will provide insight into the questions of whether massive stars can form in relative isolation, without an accompanying cadre of lower mass stars, and whether the process of star formation may be different outside stellar clusters in the “field" (e.g., Tremonti et al. 2001; Whitmore et al. 2011; Oey et al. 2013). Further, comparison of the MMTF Hα images with neutral HI gas maps (e.g., FIGGS; Begum et al. 2008) will enable study of the star formation law and Lyman continuum photon ISM propagation at the low density frontier. For example, close inspection of the MMTF observations of UGC5456 indicates that diffuse, but structured Hα may extend past the northeastern edge of the high signal-to-noise region of the image. It is interesting to examine whether such diffuse emission can be found to the edge of the HI disk, as it has been suggested that a non-negligible fraction of Lyman continuum photons may escape dwarf galaxies with low SFRs (e.g., Melena et al. 2009; Hunter et al. 2010). Spectroscopy across this region and beyond will be needed to confirm the extent of the Hα emission. Finally, to better understand the underlying ionization sources, excitation mechanisms and optical depths, measurement of emission-line ratios (e.g., [SII]λλ6717, 6731/[OIII]λ5007 to determine the ionization parameter; e.g., Pellegrini et al. 2012; Zastrow et al. 2013) are needed.

S.V. and MM acknowledge partial support from NSF grants AST-0606932 and AST-1009583. We thank the referee for a constructive report that helped to improve this paper.

Facilities: Magellan:Baade (IMACS)

REFERENCES

Begum, A., Chengalur, J. N., Karachentsev, I. D., Sharina, M. E., & Kaisin, S. S. 2008, MNRAS, 386, 1667 Boselli, A., Boissier, S., Cortese, L., et al. 2009, ApJ, 706, 1527 Boselli, A., Fossati, M., Gavazzi, G., et al. 2015, A&A, 579, A102 Calzetti, D., Lee, J. C., Sabbi, E., et al. 2015, AJ, 149, 51 da Silva, R. L., Fumagalli, M., & Krumholz, M. R. 2014, MNRAS, 444, 3275 Dettmar, R.-J. 1990, A&A, 232, L15

7 Values in Lee et al. (2009, 2011) have been updated for both the SDSS DR12 spectroscopic [NII]/Hα ratios used here, and a correction for an error in the 11HUGS/LVL photometry for UGC5456 as described in Table 1.

Dressler, A., Hare, T., Bigelow, B. C., & Osip, D. J. 2006, Proc. SPIE, 6269, 62690F Eldridge, J. J. 2012, MNRAS, 422, 794 Ferguson, A. M. N., Wyse, R. F. G., Gallagher, J. S., & Hunter, D. A. 1998, ApJ, 506, L19 Fumagalli, M., da Silva, R. L., & Krumholz, M. R. 2011, ApJ, 741, L26 Gavazzi, G., Fumagalli, M., Galardo, V., et al. 2012, A&A, 545, A16 Haffner, L. M., Dettmar, R.-J., Beckman, J. E., et al. 2009, Reviews of Modern Physics, 81, 969 Hunter, D. A., & Gallagher, J. S., III 1990, ApJ, 362, 480 Hunter, D. A., Elmegreen, B. G., & Ludka, B. C. 2010, AJ, 139, 447 Kennicutt, R. C., Jr. 1998, ARA&A, 36, 189

Kennicutt, R. C., Jr., Lee, J. C., Funes, S. J., José G., Sakai, S., & Akiyama, S. 2008, ApJS, 178, 247 Lee, J. C., Gil de Paz, A., Kennicutt, R. C., Jr., et al. 2011, ApJS, 192, 6 Lee, J. C., de Paz, A. G., Tremonti, C., Kennicutt, R., & Local Volume Legacy Team 2011, UP2010: Have Observations Revealed a Variable Upper End of the Initial Mass Function?, 440, 179 Lee, J. C., Gil de Paz, A., Tremonti, C., et al. 2009, ApJ, 706, 599 Makarov, D., Prugniel, P., Terekhova, N., Courtois, H., & Vauglin, I. 2014, A&A, 570, A13 Massey, P., Strobel, K., Barnes, J. V., & Anderson, E. 1988, ApJ, 328, 315 Melena, N. W., Elmegreen, B. G., Hunter, D. A., & Zernow, L. 2009, AJ, 138, 1203 Meurer, G. R., Hanish, D. J., Ferguson, H. C., et al. 2006, ApJS, 165, 307 Meurer, G. R., Wong, O. I., Kim, J. H., et al. 2009, ApJ, 695, 765 Monnet, G. 1971, A&A, 12, 379 Oey, M. S., Meurer, G. R., Yelda, S., et al. 2007, ApJ, 661, 801 Oey, M. S., Lamb, J. B., Kushner, C. T., Pellegrini, E. W., & Graus, A. S.

2013, ApJ, 768, 66

Pellegrini, E. W., Oey, M. S., Winkler, P. F., et al. 2012, ApJ, 755, 40 Rand, R. J., Kulkarni, S. R., & Hester, J. J. 1990, ApJ, 352, L1 Relaño, M., Kennicutt, R. C., Jr., Eldridge, J. J., Lee, J. C., & Verley, S.

2012, MNRAS, 423, 2933 Reynolds, R. J. 1971, Ph.D. Thesis Reynolds, R. J. 1984, ApJ, 282, 191 Smith, L. J., Norris, R. P. F., & Crowther, P. A. 2002, MNRAS, 337, 1309 Tremonti, C. A., Calzetti, D., Leitherer, C., & Heckman, T. M. 2001, ApJ, 555, 322 van Zee, L. 2000, AJ, 119, 2757 Veilleux, S., Weiner, B. J., Rupke, D. S. N., et al. 2010, AJ, 139, 145 Weidner, C., Kroupa, P., Pflamm-Altenburg, J., & Vazdekis, A. 2013, MNRAS, 436, 3309 Weisz, D. R., Johnson, B. D., Johnson, L. C., et al. 2012, ApJ, 744, 44 Whitmore, B. C., Chandar, R., Kim, H., et al. 2011, ApJ, 729, 78 Zastrow, J., Oey, M. S., Veilleux, S., McDonald, M., & Martin, C. L. 2011, ApJ, 741, L17 Zastrow, J., Oey, M. S., Veilleux, S., & McDonald, M. 2013, ApJ, 779, 76

TABLE 1 GALAXY PROPERTIES & Hα PHOTOMETRY

CGCG035-007 IC559 UGC5456

α, δ^a 09h 34m 44.7s, 09h 44m 43.9s, 10h 07m 19.6s, +06d 25m 32s +09d 36m 54s +10d 21m 43s cz^a [ km s^{−1} ] 574±38 541± 7 544± 3

D^b [ Mpc ] 5.2 4.9 3.8

inclination^c 50^∘ 36^∘ 80^∘

SFR_{FUV}^d [ log M_⊙ yr^{−1} ] -2.5 -2.4 -1.9

Smaller Aperture Measurements f_{Hα+[NII]} (11HUGS/LVL)^e [ log ergs s^{−1} cm^{−2} ] -13.23±0.05 -13.07±0.03 -12.23±0.05

f_{Hα} (11HUGS/LVL)^f [ log ergs s^{−1} cm^{−2} ] -13.27±0.05 -13.10±0.03 -12.26±0.05

f_{Hα} (MMTF)^g [ log ergs s^{−1} cm^{−2} ] -13.24±0.01 -13.08±0.01 -12.25±0.01

Larger Aperture Measurements f_{Hα+[NII]} (11HUGS/LVL)^h [ log ergs s^{−1} cm^{−2} ] -13.21±0.06 -13.05±0.04 -12.22±0.05

f_{Hα} (11HUGS/LVL)^f [ log ergs s^{−1} cm^{−2} ] -13.25±0.06 -13.08±0.04 -12.25±0.05

f_{Hα} (MMTF)^i [ log ergs s^{−1} cm^{−2} ] -13.23±0.02 -13.06±0.02 -12.22±0.02

Percent difference f_{Hα} (11HUGS/LVL) 6%±18% 5%±12% 1%±17%

f_{Hα} (MMTF) 3%±4% 4%±4% 7%±4%

a Right acensions, declinations, and recessional velocities taken from the NASA Extragalactic Database (NED). https://ned.ipac.caltech.edu/ b Distances taken from compilation used and documented in Kennicutt et al. (2008). Distances for CGCG035-007 and IC559 are based on a Local Group flow model, while a TRGB distance is adopted for UG5456. Uncertainty in the distance for UGC5456 is discussed in Section 4.

c Inclinations taken from the Hyperleda database (Makarov et al. 2014).

http://leda.univ-lyon1.fr/

d Extinction corrected star formation rates based on integrated FUV fluxes from Lee et al. (2009).

e Observed, integrated Hα+[NII] fluxes from the 11HUGS/LVL survey (Kennicutt (2008). The value reported here for UGC5456 corrects an error in the calculation of the previously published flux (-12.32). Specifically, the source flag given in Table 3 of Kennicutt et al. 2008 was incorrectly set to 1.3, and resulted in the application of an inappropriate zeropoint. The source flag should be 1.1.

http://irsa.ipac.caltech.edu/data/SPITZER/LVL/

f Contribution of the [NII] doublet flux removed using line ratio measurements from SDSS DR12 as discussed in Section 4.

g Observed Hα fluxes measured from the MMTF observations in the smaller aperture shown in the top panels of Figures 1-3.

h Observed Hα fluxes measured from the 11HUGS/LVL observations in the larger aperture shown in the top panels of Figures 1-3.

i Observed Hα fluxes measured from the MMTF observations within the larger aperture shown in the top panels of Figures 1-3.

TABLE 2 OBSERVATIONS

(1) (2) (3) (4) (5) (6) (7) MMTF(Hα) MMTF(blue cont) MMTF(red cont) MB6399 MB7045 Name 6562.80(1 + z) 8.1Å 8.1Å 8.1Å 6399Å/206Å 7045Å/228Å λ_c t_{exp} λ_c t_{exp} λ_c t_{exp} t_{exp} t_{exp} [Å] [Å] [s] [Å] [s] [Å] [s] [s] [s]

CGCG035-007 6575.6 6575.6 9x1200 6539.7 2x1200 6614.6 2x1200 3x600 2x600 IC559 6574.8 6575.7 10x1200 6544.6 2x1200 6614.5 3x1200 2x300 3x300 UGC5456 6574.9 6575.7 9x1200 6542.2 2x1200 6612.7 2x1200 3x600 5x600

NOTE. — (1) NED Primary Object Name (2) Wavelength at which Hα should be observed given recessional velocity in Table 1. Errors in cz translate into an uncertainty of 0.8 Å for CGCG035-007, and less than 0.2 Å for all other objects. (3) Central wavelength at position of target on focal plane 500 pixels from optical axis, and exposure time for MMTF line observations. FWHM of bandpass is given in the table header. (4) Central wavelength at position of target on focal plane 500 pixels from optical axis, and exposure time for MMTF continuum observations taken ∼40Å to the blue. FWHM of bandpass is given in the table header. (5) Central wavelength at position of target on focal plane 500 pixels from optical axis, and exposure time for MMTF continuum observations taken ∼40Å to the red. FWHM of bandpass is given in the table header. (6) Exposure time for continuum observations taken with a conventional medium-band filter to the blue of Hα. Central wavelength and FWHM of bandpass are given the table header. (7) Exposure time for continuum observations taken with a conventional medium-band filter to the red of Hα. Central wavelength and FWHM of bandpass os given the table header.

FIG. 1.— Locations of the three galaxies selected for MMTF Hα imaging on a plot comparing extinction corrected Hα and FUV luminosities of the 11HUGS/LVL sample (gray symbols) as in Lee et al. (2009). Axes with corresponding star formation rates based on the linear conversion recipes of Kennicutt (1998) are also shown. The solid line shows the one-to-one correspondence between the Hα and FUV SFRs.

FIG. 2.— Comparison of Hα emission in UGC5456 detected through standard continuum subtracted narrowband imaging from the 11HUGS/LVL survey and through deeper observations with the MMTF as reported in this paper. The unit responses of the two images have been scaled to be consistent. Top row: Hα images are displayed on a logarithmic scale with a stretch which illustrates the morphology of HII regions and higher surface brightness features. The contours shown are at flux levels 1σ and 3σ above the background, and are smoothed over four pixels. 1σ corresponds to 4.4×10^{−17} ergs s^{−1} cm^{−2} arcsec^{−2} for the 11HUGS/LVL image, and to 4.8×10^{−18} ergs s^{−1} cm^{−2} arcsec^{−2} for the MMTF image. Ellipses indicate the apertures through which the photometry reported in Table 1 is performed. Middle row: Hα images are displayed on a linear scale and are stretched to emphasize emission from the diffuse ionized gas Similarly, contours are shown, but now at 10σ,30σ, and 100σ above the background. Bottom row: Hα contours from the MMTF imaging are over-plotted on the mediumband image used for continuum subtraction. The same image is in both panels, but stretched to highlight the inner disk on the left (logarithmic scale) and the outer disk on the right (linear scale). Assuming a distance of 3.8 Mpc, the 30^{′′} bar in the lower left panel corresponds to 552 pc.

FIG. 3.— Same as Figure 1, but for IC559. 1σ corresponds to 3.2×10^{−17} ergs s^{−1} cm^{−2} arcsec^{−2} for the 11HUGS/LVL image, and to 4.1×10^{−18} ergs s^{−1} cm^{−2} arcsec^{−2} for the MMTF. Assuming a distance of 4.9 Mpc, the 30^{′′} bar in the lower left panel corresponds to 710 pc.

FIG. 4.— Same as Figure 1 and 2, but for CGCG035-007. 1σ corresponds to 3.4×10^{−17} ergs s^{−1} cm^{−2} arcsec^{−2} for the 11HUGS/LVL image, and to 4.4×10^{−18} ergs s^{−1} cm^{−2} arcsec^{−2} for the MMTF. Assuming a distance of 5.2 Mpc, the 30^{′′} bar in the lower left panel corresponds to 760 pc.