arXiv:1611.02306v1 [astro-ph.HE] 7 Nov 2016

MNRAS 000, 1–8 (2016) Preprint 17 March 2017 Compiled using MNRAS L^ATEX style file v3.0

Coronal properties of the luminous radio-quiet quasar QSO B2202–209

E. S. Kammoun,^{1⋆} G. Risaliti,^{2,3} D. Stern,^4 H. D. Jun,^4 M. Graham,^5 A. Celotti,^{1,6,7} E. Behar,^8 M. Elvis,^9 F. A. Harrison,^5 G. Matt^{10} and D. J. Walton^{4,5}

1SISSA, via Bonomea 265, I-34135 Trieste, Italy 2Dipartimento di Fisica e Astronomia, Università di Firenze, via G. Sansone 1, 50019 Sesto Fiorentino (Firenze), Italy 3INAF - Osservatorio Astrofisico di Arcetri, Largo E. Fermi 5, I-50125 Firenze, Italy 4Jet Propulsion Laboratory, California Institute of Technology, 4800 Oak Grove Drive, Pasadena, CA 91109, USA 5California Institute of Technology, 1200 East California Boulevard, Pasadena, CA 91125, USA 6INAF -Osservatorio Astronomico di Brera, via Bianchi 46, I-23807 Merate, Italy 7INFN - Sezione di Trieste, via Valerio 2, I-34127 Trieste, Italy 8Department of Astronomy, University of Maryland, College Park, MD 20742, USA 9Harvard Smithsonian Center for Astrophysics, 60 Garden Street, Cambridge, MA 02138, USA 10Dipartimento di Matematica e Fisica, Università degli Studi Roma Tre, via della Vasca Navale 84, I-00146 Roma, Italy

Accepted XXX. Received YYY; in original form ZZZ

ABSTRACT

We present an analysis of the joint XMM-Newton and NuSTAR observations of the radio-quiet quasar QSO B2202–209. Using an optical observation from the Hale Telescope at the Palomar Observatory, we revise the redshift of the source from the previously reported z = 1.77 to z = 0.532, and we estimate the mass of the central black hole, log(M_{BH}/M_⊙) = 9.08 ± 0.18. The X-ray spectrum of this source can be well described by a power-law of photon index Γ = 1.82±0.05 with E_{cut} = 152^{+103}_{−54} keV, in the rest frame of the source. Assuming a Comptonisation model, we estimate the coronal temperature to be kT_e = 42 ± 3 keV and kT_e = 56 ± 3 keV for a spherical and a slab geometry, respectively. The coronal properties are comparable to the ones derived for local AGN, despite a difference of around one order of magnitude in black hole mass and X-ray luminosity (L_{2−10} = 1.93 × 10^{45} erg s^{−1}). The quasar is X-ray loud, with an unusually flat observed optical-to-X-ray spectral slope α_{OX} = 1.00 ± 0.02, and has an exceptionally strong optical [O iii] line. Assuming that both the X-ray emission and the [O iii] line are isotropic, these two extreme properties can be explained by a nearly edge-on disk, leading to a reduction in the observed UV continuum light.

Key words: galaxies: active – galaxies: nuclei – quasars: individual: QSO B2202–209 – X-rays: galaxies

1 INTRODUCTION

It is generally thought that the primary hard X-ray continuum emission arising around accreting black holes (active galactic nuclei (AGN) and X-ray binaries), is due to Compton up-scattering of UV/soft X-ray disc photons off a hot (∼ 10^9 K), trans-relativistic medium, usually referred to as the X-ray corona (e.g. Shapiro et al. 1976; Haardt & Maraschi 1993; Petrucci et al. 2001a,b). The resulting spectrum, known as the ‘primary’ emission, can be described by a power-law with a high-energy exponential cutoff that depends on the Compton y-parameter of the

⋆ E-mail: ekammoun@sissa.it medium, which is a function of the electron temperature (kT_e) and the optical depth (τ) of the corona. These electrons are thought to be heated and confined by magnetic fields emerging from the ionized accretion disc (e.g. Galeev et al. 1979; Haardt & Maraschi 1991; Merloni & Fabian 2001).

In addition to being directly detected by an observer at infinity, the primary emission will irradiate and be ‘reflected’ by the accretion disc (George & Fabian 1991). Xrays incident on the disc will be subjected to Compton scattering and photoelectric absorption followed either by Auger de-excitation or by fluorescent line emission (see e.g. Lightman & White 1988; George & Fabian 1991). The resulting reflection spectrum is characterized by the iron Kα emission line at ∼ 6.4 − 7.0 keV (depending on the ionization

© 2016 The Authors

2 E. S. Kammoun et al.

state of the disc) and a broad component peaked at around 20–30 keV, known as ‘Compton hump’. It should be noted that the accretion disc is not the only reflector able to reprocess the primary emission in AGN. Many sources reveal the presence of narrow Fe Kα emission lines (e.g. Bianchi et al. 2009) that could be explained by reflection from distant, dense material such as the narrow line region or the putative molecular torus invoked in AGN unification models (Ghisellini et al. 1994).

Several lines of evidence suggest that the corona is compact, and located close to the black hole. Spectral-timing and reverberation studies, for example, are suggestive of a physically small corona that lies 3 − 10 r_g (where r_g = GM/c^2 is the gravitational radius of a BH with mass M) above the central BH (e.g. Fabian et al. 2009; Emmanoulopoulos et al. 2014; Parker et al. 2014; Gallo et al. 2015). It has been inferred from X-ray microlensing analyses of some bright lensed quasars that the hard X-rays are emitted from compact regions with half-light radii less than 6 r_g (Morgan et al. 2008; Chartas et al. 2009; Reis & Miller 2013). Moreover, eclipses of the X-ray source have also placed constraints on the size of the hard X-ray emitting regions, r ≲ 10 r_g (e.g. Risaliti et al. 2007; Maiolino et al. 2010; Sanfrutos et al. 2013). Analyses of the emissivity profile of the accretion disc (Wilkins & Fabian 2011, 2012) suggest an extended corona a few gravitational radii from the accretion disc. More recently, Wilkins et al. (2015) and Wilkins & Gallo (2015) explained the long and short time-scale variabilities seen in Mrk 335 in the context of an “aborted jet launch” as proposed earlier by Ghisellini et al. (2004). However, the coronal temperature and optical depth have remained poorly constrained due to the lack of high-quality X-ray measurements extending above 10 keV. Complex spectral components, including reflection from the accretion disc as well as from distant matter, contribute to the whole X-ray spectrum, making a precise determination of the cutoff energy challenging.

The unprecedented sensitivity of NuSTAR (Harrison et al. 2013) covering the 3 − 79 keV band, has provided for the first time the capability to measure spectral parameters in a precise and robust way including both the Compton reflection component and the highenergy cutoff (E_{cut} ∼ 100 − 180 keV) in some of the brightest local AGN, with luminosities on the order of 10^{42−44} erg s^{−1} in the NuSTAR energy band (e.g. Marinucci et al. 2014; Brenneman et al. 2014; Ballantyne et al. 2014; Baloković et al. 2015; Matt et al. 2015). Combining the high sensitivity of XMM-Newton (Jansen et al. 2001) at soft X-ray energies with that of NuSTAR at hard energies, we are able to investigate the coronal properties of more distant and more luminous quasars. This allows to understand better the coronal physics and the dependence of the corona on luminosity and redshift.

In this work, we study the X–ray spectrum provided by a coordinated XMM-Newton and Nustar observation of the radio-quiet quasar (RQQ) QSO B2202–209 (hereafter B2202, also known as PB 5062). The redshift of the source was estimated by Reboul et al. (1987) to be z = 1.77, implying a luminosity of L_{2−10} ≃ 3 × 10^{46} erg s^{−1}, which would make this source erroneously, as we will show, the most luminous RQQ within its redshift (Eitan & Behar 2013). However, by analysing its X-ray spectrum, we found the need of an additional absorber at an intermediate redshift of 0.53. Reboul et al. (1987) determined the redshift of the source by identifying a broad emission line observed at ∼ 4290 Åwith a C ivλ1549 line. However, instead identifying the line with Mg iiλ2800 implies a redshift of 0.532, compatible with the redshift of the X-ray absorber. This discrepancy motivated us to obtain a higher quality optical spectrum using the Hale Telescope at Palomar Observatory, presented in the next section. The Palomar data shows that the source is actually situated at a redshift of 0.532. The main aim of this project is to measure the coronal properties of the source. The measurements of E_{cut} for local radio-quiet AGN are based on the deviation (on the order of 10-30%) from a power-law at the highest energy part of the NuSTAR spectrum. Considering the redshift of B2202, particularly for the previously assumed z = 1.77, E_{cut} is shifted to lower observed energies, helping compensate for the cosmological dimming.

This paper is structured as follows: Section 2 describes the observations and the data reduction; Section 3 presents the spectral analysis; Finally, in Section 4 we provide a brief summary of our main results and discuss their implications. The following cosmological parameters are assumed: Ω_M = 0.27, Ω_Λ = 0.73, and H_0 = 70 km s^{−1} Mpc^{−1}.

2 OBSERVATIONS AND DATA REDUCTION

2.1 Palomar Observations

We obtained an optical spectrum of B2202 using the dualbeam Double Spectrograph on the 200-inch Hale Telescope at Palomar Observatory. The 900 s spectrum, obtained on UT 2016 May 28 in photometric conditions, used the 1.^{′′}5 wide slit, the 5500 Å dichroic to split the light, the 600 ℓ mm^{−1} grating on the blue arm (λ_{blaze} = 4000 Å; spectral resolving power R ≡ λ/Δλ ∼ 1200), and the 316 ℓ mm^{−1} grating on the red arm (λ_{blaze} = 7500 Å; R ∼ 1800). We processed the data using standard techniques within IRAF, and calibrated the spectrum using an archival sensitivity function obtained in February 2016 using the same instrument configuration and observing conditions.

The processed spectrum, shown in the upper panel of Figure 1, shows the source to be an AGN at z = 0.532 with many standard emission features identified, including broad Mg iiλ2800, broad hydrogen Balmer emission lines, and narrow [O iii]λλ4959, 5007; the redshift has been determined from the latter features. In particular, the new data clearly demonstrate that the line at ∼ 4290 Åpreviously identified as C iv by Reboul et al. (1987) is indeed Mg ii.

2.2 X-ray observations

B2202 was observed simultaneously by XMM-Newton and NuSTAR, on 2015 November 06-07 (Obs. IDs 0764370201 and 60101030002, respectively). The basic observation details are presented in Table 1. Here we summarise our data reduction procedures.

2.2.1 XMM-Newton

The XMM-Newton data were reduced using SAS v.15.0.0 and the latest calibration files.We followed the standard pro-

MNRAS 000, 1–8 (2016)

Coronal properties of QSO B2202–209 3

Figure 1. Upper panel: optical spectrum obtained using the Palomar DBSP. Lower panels: X-ray background-subtracted source spectra (continuous lines) and background spectra (dots). Left panel: the spectra extracted from the EPIC-pn (black), EPIC MOS1 (blue) and EPIC MOS2 (red) instruments. Right panel: the spectra extracted from the FPMA (black) and FPMB (red) modules.

cedure for reducing the data of the EPIC-pn (Strüder et al. 2001) and the two EPIC-MOS (Turner et al. 2001) CCD cameras, all operating in full frame mode with a thin filter for the EPIC-pn and a medium filter for the EPIC-MOS cameras. The EPIC-pn and EPIC-MOS data were processed using EPPROC and EMPROC, respectively. Source spectra and light curves were extracted from a circular region of radius ∼ 40^{′′} . The corresponding background spectra and light curves were extracted from an off-source circular region located on the same CCD chip, with a radius approximately twice that of the source to ensure a high signal-to-noise ratio. We filtered out periods with strong background flares estimated to be around 7.5 ks. We corrected the light curves for the background count rate using EPICLCCORR. The extracted light curves did not show any significant spectral variability. Response matrices were produced using the FTOOLs RMF-

GEN and ARFGEN. We re-binned the observed spectra, shown

in the bottom left panel of Figure 1, using the SAS task

SPECGROUP to have a minimum S/N of 5 in each energy bin.

The MOS1 and MOS2 spectra are consistent, so we combined them using the SAS command COMBINE.

2.2.2 NuSTAR

We reduced the NuSTAR data following the standard pipeline in the NuSTAR Data Analysis Software (NuSTAR- DAS v1.4.1), and instrumental responses from NuSTAR CALDB v20151008. We cleaned the unfiltered event files with the standard depth correction, which significantly reduces the internal background at high energies, and South Atlantic Anomaly passages were excluded from our analysis. We extracted the time-averaged source and background

MNRAS 000, 1–8 (2016)

4 E. S. Kammoun et al.

Table 1. Net exposure times, and count rates estimated from the background-subtracted data in the 0.5–10 keV range for XMM- Newton, and the 4-30 keV range for NuSTAR.

Instrument Net exposure Count Rate

(ks) (count/s)

EPIC-PN 60.5 0.501 ± 0.003

MOS 1 69.7 0.152 ± 0.001

MOS 2 69.4 0.156 ± 0.001

FPMA 106.8 0.0233 ± 0.0005

FPMB 106.5 0.0227 ± 0.0005

spectra from circular regions of radii 40^{′′} and 100^{′′}, respectively, for both focal plane modules (FPMA and FPMB) using the HEASoft task NUPRODUCT, and requiring a minimum of 50 counts per bin. The extracted spectra are presented in the bottom right panel of Figure 1. The spectra extracted from both modules are consistent with each other. The background starts to dominate the source above ∼ 30 keV. For that reason, we decided to analyse the NuSTAR data in the observed 4 − 30 keV energy range, which corresponds to the 6 − 46 keV energy range in the rest frame of the source. The data from FPMA and FPMB are analysed jointly in this work, but they are not combined together.

3 SPECTRAL ANALYSIS

Throughout this work, spectral fitting was done using XSPEC

v12.9 (Arnaud 1996). Unless stated otherwise, uncertainties

are listed at the 90% confidence level (Δχ^2 = 2.71). We included a variable constant, for each instrument, in order to account for the residual uncertainties in the flux calibration between the various detectors, fixing the constant for the EPIC-pn data to unity. We considered the EPIC-pn and the merged EPIC-MOS spectra in the 0.5–10 keV range, and the FPMA/B spectra in the 4-30 keV band, as mentioned above.

First, we fitted the spectra with a simple, absorbed power-law with an exponential high-energy cutoff (CUTOFFPL model in XSPEC). We fixed the Galactic absorption to the equivalent hydrogen column density in the line of sight towards B2202, N_H = 5.52 × 10^{20} cm^{−2} (Kalberla et al. 2005). Furthermore, we considered an intrinsic neutral absorber at the redshift of the source (ZWABS). The model fit is unacceptable (χ^2/ν = 1.32), mostly due to the need of an extra ionised absorption component. For that reason, we add a partial covering absorption by partially ionized material (ZXIPCF) at the redshift of the source. The fit improved (χ^2/ν = 1.12). However, a significant deficit could be detected in the residuals at energy ∼ 1.8 keV, most probably due to inaccuracies in modelling the Si absorption in the CCD detectors. We modelled this deficit using a Gaussian absorption profile with a free centroid energy, width, and normalisation (in the observed frame). The fit improves significantly by adding this line (Δχ^2/Δν = 25/3, F-test null probability = 4.14 × 10^{−5}), resulting in a χ^2/ν = 1.05. The final model and data/model ratio are presented in Figure 2. We performed a Monte Carlo Markov Chain (MCMC) analysis to

Figure 2. Upper panel: observed spectra from EPIC-pn (blue) and NuSTAR (green) plotted together with the best-fit model (black line) composed of an absorbed cutoff power-law. Lower panel: data/model ratio for the EPIC-pn (blue), EPIC-MOS (red), and NuSTAR (green) data.

estimate the errors on the parameters, using the Goodman- Weare algorithm (Goodman & Weare 2010) with a chain of 50,000 elements, and discarding the first 5000 elements as part of the “burn-in” period. We found a high-energy cutoff E_{cut} = 99^{+67}_{−35} keV in the observed frame that corresponds to an energy of 152^{+103}_{−54} keV in the rest frame of the source, with a photon index Γ = 1.82 ± 0.05 . In the upper panel of Figure 3, we present the contour plots derived from the MCMC analysis showing the constraints on the photon index Γ and the high-energy cutoff E_{cut} in the rest frame of the source. Moreover, we identified a partially ionised absorber � log � ξ(erg s^{−1} cm^{−1}) � = 0.39^{+0.80}_{−0.75} � situated at the redshift of the source covering ∼ 30% of the source and having a column density N_H = 2.32^{+0.83}_{−0.88} × 10^{23}cm^{−2}. In addition, we identified a neutral absorber at the rest frame of the source with a column density N_H = 1.4^{+0.22}_{−0.20} ×10^{21}cm^{−2}. The best-fit parameters are reported in Table 2.

The measurement of E_{cut} could be affected by the presence of a reflection component in the spectrum. In order to test the stability of our measurement, we replaced the power-law model by the neutral reflection model PEX-

MON (Nandra et al. 2007), considering an intermediate incli-

nation of 60^∘ and solar abundances. The fit improves by Δχ^2 = −6 for one additional free parameter. We found a low reflection fraction (R_{frac} = 0.31^{+0.24}_{−0.21}) and a low highenergy cutoff of E_{cut} = 69^{+47}_{−25} keV in the rest frame of the source, but consistent within the error bars with the value found assuming a simple cutoff power-law model. In addition, we tested the possibility of having relativistic reflection using the RELXILL model (Dauser et al. 2013; García et al. 2014; Dauser et al. 2016). The fit was statistically accepted (χ^2/ν = 1.04), and E_{cut} was consistent with the values determined above. However, neither the reflection fraction nor the ionisation parameter of the disc could be well constrained.

Finally, assuming that the power-law spectrum is obtained by Comptonisation of soft photons arising from the accretion disc by hot electrons in a corona, we substituted the cutoff power-law with the Comptonisation model COMPTT

MNRAS 000, 1–8 (2016)

Coronal properties of QSO B2202–209 5

Table 2. Best-fit parameters obtained assuming a cutoff powerlaw model, and a Comptonisation model for both spherical and slab geometries.

Parameter Cutoff Compton Compton

(spherical) (slab)

zwabs

N_H (10^{21} cm^{−2}) 1.40^{+0.22}_{−0.20} 1.40^{+0.13}_{−0.12} 1.38^{+0.15}_{−0.13}

zxipcf

N_H (10^{23} cm^{−2}) 2.32^{+0.83}_{−0.88} 2.32^{+0.68}_{−0.55} 2.43^{+0.77}_{−0.45} log � ξ(erg s^{−1} cm^{−1}) � 0.39^{+0.80}_{−0.75} 0.40^{+0.79}_{−0.47} 0.36^{+0.76}_{−0.35}

CF (%) 30^{+6}_{−5} 30^{+4}_{−3} 29^{+4}_{−3}

cutoffpl

Γ 1.82 ± 0.05 – –

E^a_{cut} (keV) 99^{+67}_{−35} – –

Norm (×10^{−4}) 5.26^{+0.54}_{−0.41} – –

compTT

kT^b_e (keV) – 42 ± 3 56 ± 3

τ – 2.40^{+0.18}_{−0.16} 0.63^{+0.06}_{−0.05}

Norm (×10^{−4}) – 4.23^{+0.45}_{−0.41} 3.07^{+0.34}_{−0.28}

gaussian (absorption)

E (keV) 1.8 ± 0.04 1.8 ± 0.04 1.8 ± 0.03

σ (eV) 72^{+55}_{−40} 72^{+47}_{−34} 73^{+54}_{−38}

Norm (×10^{−6}) 4.75^{+1.77}_{−2.34} 4.73^{+1.47}_{−1.87} 4.79^{+1.58}_{−2.17}

χ^2/d.o.f. 363/344 363/344 363/344

1.05 1.05 1.05

Notes. a The cutoff energy is reported in the observed frame. b The electron temperature is reported in the rest frame of the source.

(Titarchuk 1994). This model allows us to determine the coronal temperature and optical depth assuming either a spherical or a slab geometry. We fixed the temperature of the seed photons, assumed to follow a Wien distribution law, to kT = 20 eV. We obtained a fit statistically similar to the one obtained for the cutoff power-law model. We performed an MCMC analysis similar to the one mentioned previously, and found the coronal temperature and optical depth to be kT_e = 42 ± 3 keV, τ = 2.40^{+0.18}_{−0.16} (spherical geometry), kT_e = 56 ± 3 keV, τ = 0.63^{+0.06}_{−0.05} (slab geometry). The electron temperatures are in agreement with the estimation of E_{cut}, within the error bars, obtained assuming a high-energy cutoff power-law model (E_{cut} ≃ 2 − 3kT_e, e.g. Petrucci et al. 2001b). The optical depth is larger for the spherical geometry. This is expected because the optical depth estimated assuming a spherical geometry is the radial (effective) depth, while the slab optical depth is the vertical one that should be lower than the effective one. The kT_e − τ contour plots for both geometries are presented in the lower panel of Figure 3. The best-fit parameters are shown in Table 2. The observed 2–10 keV flux is F_{2−10} = (1.43 ± 0.07) × 10^{−12} erg cm^{−2} s^{−1}, while the unabsorbed 2–10 keV luminosity, in the rest frame, is L_{2−10} = (1.93 ± 0.07) × 10^{45} erg s^{−1}.

B2202 was also observed by XMM-Newton in May 2001 (Obs. ID 12440301, hereafter obs. 1), for ∼ 30 ks. We extracted the EPIC-pn/MOS data in a similar way to that described in Section 2.2.1. We fit the EPIC spectra of this observation by an absorbed power-law model, similar to the best-fit model presented above, but without considering either the high-energy cutoff or the absorption feature at ∼ 1.8 keV. The fit is good (χ^2/ν = 0.97) and the parameters of both neutral and ionised absorbers are consistent, within the error bars, with the ones found in 2015. However, we found a steeper power-law with a photon index Γ = 1.97^{+0.05}_{−0.06}. During obs. 1, the source was ∼ 1.5 times brighter than in 2015 (unabsorbed luminosity, L_{2−10} = 2.92×10^{45} erg s^{−1}) showing a behaviour often observed in AGNs, where the X-ray spectrum gets steeper when the source is brighter.

4 DISCUSSION AND CONCLUSIONS

We present joint XMM-Newton and NuSTAR observations of the luminous quasar B2202. The 0.5–30 keV spectrum of this source could be fitted with an absorbed (a neutral absorber and a partially ionised absorber at the redshift of the source) power-law (Γ ∼ 1.82) with an exponential highenergy cutoff (E_{cut} ∼ 153 keV, at the rest frame of the source). No strong reflection features have been identified in the spectrum.

In order to derive the black hole mass (M_{BH}) of B2202, we fit the Hβ line region with the IDL package MPFIT (Markwardt 2009). Approximating the uncertainties to the flux using the standard deviation of the spectrum outside the emission lines, we fit the rest-frame 4200-5600 Å including a power-law continuum, broad and narrow Gaussian components for the Hβ line, narrow [O iii]λλ4959, 5007 doublet, narrow He iiλ4686 and the blended Hγ and [O iii]λ4363. The contribution from the Fe ii complex is negligible for this target and thus was ignored. The full widths at half maximum (FWHM) and the equivalent widths (EW) of the Hβ lines and the [O iii]λλ4959, 5007 doublet are presented in Table 3. Using the width of the broad Hβ line and the monochromatic 5100 Å luminosity (L_{5100}), we get log(M_{BH}/M_⊙) = 9.08 ± 0.18 from the Jun et al. (2015) estimator. This implies an Eddington luminosity of L_{Edd} = (1.56 ± 0.28) × 10^{47} erg s^{−1}. Note that L_{5100} is derived directly from the spectrum, that was checked to yield consistent iband magnitude to that from the SDSS^1 imaging, within a 10% difference. We applied then the bolometric correction to L_{5100} suggested by Marconi et al. (2004), L_{bol}/ν_B L_B = 7.9±2.9, and we estimate the bolometric luminosity of this source to be L_{bol} = (5.72±2.15)×10^{45} erg s^{−1}. This means that the source

1 http://skyserver.sdss.org/dr10/en/home.aspx

MNRAS 000, 1–8 (2016)

6 E. S. Kammoun et al.

Figure 3. Upper panel: Γ − E_{cut} contour plot (in the rest frame) for the cutoff powerlaw model. Lower panel: kT_e − τ contour plot (in the rest frame) for the Comptonisation model assuming a spherical geometry and a slab geometry. We plot the 68% (dotted red lines), 95% (dashed green lines ) and 99.7% (solid blue lines) confidence levels.

is accreting at ∼ 3.66% of its Eddington limit. However, by applying the bolometric correction to L_{2−10} (equation 21 in Marconi et al. 2004), we obtain a higher bolometric luminosity, L_{bol} = 1.79 × 10^{47} erg s^{−1} ≃ 1.15 L_{Edd}. Moreover, we estimated the monochromatic luminosity of the source at 2500 Å to be L_ν(2500 Å) = (1.06 ± 0.02) × 10^{45} erg s^{−1}, which implies an optical-to-X-ray spectral slope α_{OX} = −0.384 × log[L_{2 keV}/L_{2500}] = 1.01 ± 0.02. This is a strong outlier in the α_{OX}-luminosity relation (α_{OX} ∼ 1.6 for typical quasars of the same luminosity, Lusso & Risaliti 2016). However, the large EW of [O iii]λ5007 can be indicative of a high inclination angle θ between between the disc axis and the line of sight. In fact, we observe the projected EW along the line of sight, EW_O = EW^∗/ cos θ, where EW_O is the observed EW, and EW^∗ is the EW as measured in a face-on disc. By considering an average value of EW^∗, for all quasars, to be ∼ 11 Å(Risaliti et al. 2011; Bisogni et al. 2017), we obtain θ ≃ 85^∘. This means that the disc is observed nearly edgeon and can explain the high X-ray loudness of the source. In other terms, having such a high inclination of the disc with respect to the line of sight, the intrinsic UV luminosity

Table 3. Full widths at half maximum and equivalent widths of the broad and narrow Hβ lines and the [O iii]λλ4959, 5007 doublet seen in the Palomar spectra.

Line FWHM (km s^{−1}) EW (Å)

Hβ_{broad} 6940 ± 1033 128.4 ± 5.9

Hβ_{narrow} 961 ± 49 18.4 ± 8.5

[O iii]λ4959 1144 ± 77 49 ± 3

[O iii]λ5007 995 ± 50 145.7 ± 3.4

should be higher than the observed one. Instead, the inclination will not affect the X-ray primary that is thought to be emitted isotropically. If we assume an intrinsic L_{5100} to be larger than the observed value by a factor of 1/ cos θ, then this leads to an intrinsic α_{OX, int} ≃ 1.43 comparable to other sources. In addition, using the [O iii]λ5007 luminosity (L_{[O} iii_] = (2.07 ± 0.32) × 10^{43} erg s^{−1}), we estimated the expeected X-ray luminosity, following the correlation found by Panessa et al. (2006), to be L_X = (3.2 ± 0.6) × 10^{45} erg s^{−1}. The estimated value of L_X is in agreement within a factor of 1.65 with the value derived from the X-ray analysis in Sec. 3. Given the isotropicity of the X-ray primary emission, the high inclination of the disc and the agreement between the X-ray and the [O iii] measurements, this is suggestive that, for this source, the measurement of L_{bol} using the Xray luminosity is more reliable compared to the bolometric correction estimated using L_{5100}.

Interestingly, we found that the coronal properties are in agreement with the ones determined for local less luminous and less massive Seyfert galaxies (e.g. Fabian et al. 2015; Lubiński et al. 2016, and references therein). Lubiński et al. (2016) analysed the hard X-ray spectra of 28 Seyfert galaxies based on observations with INTEGRAL (Winkler et al. 2003). The values of the electron temperature, photon index and reflection fraction that we found are in good agreement with the median values of their full sample (⟨kT_e⟩ = 48^{+57}_{−14} keV, ⟨Γ⟩ = 1.81^{+0.18}_{−0.05}, and ⟨R_{frac}⟩ = 0.32^{+0.33}_{−0.28}, respectively). Lubiński et al. (2016) suggest that the small value of R_{frac} is indicative of a small solid angle under which the corona is seen from the disc. In other terms, this means a reduction in the flux of seed photons emitted by the disc that are cooling the corona. Moreover, they suggest the need of an additional process (such as synchrotron self-Compton) that is able to explain the efficient cooling of of a compact corona, close to the BH and separated geometrically from the accretion disc. Note that the low amount of reflection is in agreement with the X-ray Baldwin effect (e.g. Iwasawa & Taniguchi 1993) whereby the equivalent width of the Fe Kα line diminishes with X-ray luminosity. In fact, we modelled the Fe Kα line by adding a Gaussian in emission, to the high-energy cutoff power-law model, and we estimated its EW to be ≤ 40 eV. However, in our case, the high inclination of the disc can explain the small values of R_{frac} and EW(Fe Kα), since most of the reflected light coming from the accretion disc will not be emitted in the direction of the observer. Instead, the weak reflection can be associated with sparse clouds, most likely to be in the broad line region, covering a small fraction of

MNRAS 000, 1–8 (2016)

Coronal properties of QSO B2202–209 7

Figure 4. The observed SED of the source, obtained using photometric data from WISE in 2010 (magenta triangles) and 2MASS in 2000 (cyan squares), in addition to the Palomar Observatory spectrum obtained in 2016 (red dotted line) and corrected for the Galactic extinction and for the Oxygen A-band absorption, the XMM-Newton spectrum obtained in 2001 (red dots) and the joint XMM-Newton and NuSTAR observations in 2015 (blue points). The typical radio-quiet quasar SEDs (Elvis et al. 1994) is also plotted (black solid line) for comparison.

the solid angle. The similarities in both spectral shape and cut-off energy between B2202 and local AGNs are therefore indicative of a universal process determining the spectrum of the X-ray emission, with the strength of the coupling between disc and corona affecting only the overall normalization of such spectra.

We plot in Figure 4 the observed multi-epoch spectral energy distribution (SED) of the source by adding, to the optical and X-ray spectra analysed in this paper, the XMM- Newton spectrum obtained in 2001 and the archival photometric data obtained from the Two Micron All Sky Survey^2 (2MASS, observed in 2000; Skrutskie et al. 2006), and the Wide-field Infrared Survey Explorer^3(WISE, observed in 2010; Wright et al. 2010). We compare the observed SED to a typical SED of a RQQ (Elvis et al. 1994) trying to match the X-ray spectra obtained in 2015. Fitting the SED properly, taking into account the complications and the long time-scale variability of the source, is beyond the scope of this paper. However, it is obvious that the optical spectrum is fainter and redder compared to a standard SED, but this is expected given the high inclination of the accretion disc, which leads the emission from the host galaxy, usually negligible, to show up. Moreover, interestingly, the IR emission appears to be low compared to the standard quasar SED. Adding to this the fact that the X-ray spectra are barely affected by absorption, and the small amount of reflection, this implies a particular system in which we observe the accretion

2 http://irsa.ipac.caltech.edu/Missions/2mass.html 3 http://irsa.ipac.caltech.edu/Missions/wise.html disc nearly edge-on with no evidence of any Compton thick pc scale reprocessor, indicating a small covering fraction by the torus, if any.

This source was chosen on the basis of the previously reported redshift that mistakenly let it be considered one of the most luminous RQQs. However, our results on a less extreme quasar demonstrate that joint NuSTAR and XMM- Newton observations with a moderate exposure time are capable of making good measurements of coronal properties for quasars at cosmological redshifts. This significantly extends the previous work done primarily on relatively local and lower luminosity Seyferts (e.g. Fabian et al. 2015; Lubiński et al. 2016).

ACKNOWLEDGEMENTS

This research made use of data from the NuSTAR mission, a project led by the California Institute of Technology, managed by the Jet Propulsion Laboratory, and funded by NASA, XMM-Newton, an ESA science mission with instruments and contributions directly funded by ESA Member States and NASA, and the Hale Telescope at Palomar Observatory. This research has made use of the NuSTAR Data Analysis Software (NuSTARDAS) jointly developed by the ASI Science Data Center (ASDC, Italy) and the California Institute of Technology (USA). We like to acknowledge S.G. Djorgovski for providing the Palomar observations. We thank the anonymous referee for comments and suggestions, which significantly contributed to improving the quality of the manuscript. EB received funding from

MNRAS 000, 1–8 (2016)

8 E. S. Kammoun et al.

the European Unions Horizon 2020 research and innovation programme under the Marie Sklodowska-Curie grant agreement no. 655324.

Facilities: NuSTAR, Palomar: DBSP, XMM-Newton.

REFERENCES

Arnaud K. A., 1996, in Jacoby G. H., Barnes J., eds, Astronomical Society of the Pacific Conference Series Vol. 101, Astronomical Data Analysis Software and Systems V. p. 17 Ballantyne D. R., et al., 2014, ApJ, 794, 62 Baloković M., et al., 2015, ApJ, 800, 62 Bianchi S., Guainazzi M., Matt G., Fonseca Bonilla N., Ponti G., 2009, A&A, 495, 421 Bisogni S., Marconi A., Risaliti G., 2017, MNRAS, 464, 385 Brenneman L. W., et al., 2014, ApJ, 788, 61 Chartas G., Kochanek C. S., Dai X., Poindexter S., Garmire G., 2009, ApJ, 693, 174 Dauser T., Garcia J., Wilms J., Böck M., Brenneman L. W., Falanga M., Fukumura K., Reynolds C. S., 2013, MNRAS, 430, 1694 Dauser T., Garcia J., Walton D. J., Eikmann W., Kallman T., McClintock J., Wilms J., 2016, preprint, (arXiv:1601.03771) Eitan A., Behar E., 2013, ApJ, 774, 29 Elvis M., et al., 1994, ApJS, 95, 1 Emmanoulopoulos D., Papadakis I. E., Dovčiak M., McHardy I. M., 2014, MNRAS, 439, 3931 Fabian A. C., et al., 2009, Nature, 459, 540 Fabian A. C., Lohfink A., Kara E., Parker M. L., Vasudevan R., Reynolds C. S., 2015, MNRAS, 451, 4375 Galeev A. A., Rosner R., Vaiana G. S., 1979, ApJ, 229, 318 Gallo L. C., et al., 2015, MNRAS, 446, 633 García J., et al., 2014, ApJ, 782, 76 George I. M., Fabian A. C., 1991, MNRAS, 249, 352 Ghisellini G., Haardt F., Matt G., 1994, MNRAS, 267, 743 Ghisellini G., Haardt F., Matt G., 2004, A&A, 413, 535 Goodman J., Weare J., 2010, Comm. App. Math. Comp. Sci., 5, 65 Haardt F., Maraschi L., 1991, ApJ, 380, L51 Haardt F., Maraschi L., 1993, ApJ, 413, 507 Harrison F. A., et al., 2013, ApJ, 770, 103 Iwasawa K., Taniguchi Y., 1993, ApJ, 413, L15 Jansen F., et al., 2001, A&A, 365, L1 Jun H. D., et al., 2015, ApJ, 806, 109 Kalberla P. M. W., Burton W. B., Hartmann D., Arnal E. M., Bajaja E., Morras R., Pöppel W. G. L., 2005, A&A, 440, 775 Lightman A. P., White T. R., 1988, ApJ, 335, 57 Lubiński P., et al., 2016, MNRAS, 458, 2454 Lusso E., Risaliti G., 2016, ApJ, 819, 154 Maiolino R., et al., 2010, A&A, 517, A47 Marconi A., Risaliti G., Gilli R., Hunt L. K., Maiolino R., Salvati M., 2004, MNRAS, 351, 169 Marinucci A., et al., 2014, MNRAS, 440, 2347 Markwardt C. B., 2009, in Bohlender D. A., Durand D., Dowler P., eds, Astronomical Society of the Pacific Conference Series Vol. 411, Astronomical Data Analysis Software and Systems XVIII. p. 251 (arXiv:0902.2850) Matt G., et al., 2015, MNRAS, 447, 3029 Merloni A., Fabian A. C., 2001, MNRAS, 328, 958 Morgan C. W., Kochanek C. S., Dai X., Morgan N. D., Falco E. E., 2008, ApJ, 689, 755 Nandra K., O’Neill P. M., George I. M., Reeves J. N., 2007, MNRAS, 382, 194 Panessa F., Bassani L., Cappi M., Dadina M., Barcons X., Carrera F. J., Ho L. C., Iwasawa K., 2006, A&A, 455, 173

Parker M. L., et al., 2014, MNRAS, 443, 1723 Petrucci P. O., Merloni A., Fabian A., Haardt F., Gallo E., 2001a, MNRAS, 328, 501 Petrucci P. O., et al., 2001b, ApJ, 556, 716 Reboul H., Vanderriest C., Fringant A. M., Cayrel R., 1987, A&A, 177, 337 Reis R. C., Miller J. M., 2013, ApJ, 769, L7 Risaliti G., Elvis M., Fabbiano G., Baldi A., Zezas A., Salvati M., 2007, ApJ, 659, L111 Risaliti G., Salvati M., Marconi A., 2011, MNRAS, 411, 2223 Sanfrutos M., Miniutti G., Agís-González B., Fabian A. C., Miller J. M., Panessa F., Zoghbi A., 2013, MNRAS, 436, 1588 Shapiro S. L., Lightman A. P., Eardley D. M., 1976, ApJ, 204, 187 Skrutskie M. F., et al., 2006, AJ, 131, 1163 Strüder L., et al., 2001, A&A, 365, L18 Titarchuk L., 1994, ApJ, 434, 570 Turner M. J. L., et al., 2001, A&A, 365, L27 Wilkins D. R., Fabian A. C., 2011, MNRAS, 414, 1269 Wilkins D. R., Fabian A. C., 2012, MNRAS, 424, 1284 Wilkins D. R., Gallo L. C., 2015, MNRAS, 449, 129 Wilkins D. R., Gallo L. C., Grupe D., Bonson K., Komossa S., Fabian A. C., 2015, MNRAS, 454, 4440 Winkler C., et al., 2003, A&A, 411, L1 Wright E. L., et al., 2010, AJ, 140, 1868

This paper has been typeset from a TEX/L^ATEX file prepared by the author.

MNRAS 000, 1–8 (2016)