arXiv:1703.02357v1 [astro-ph.SR] 7 Mar 2017

Astronomy & Astrophysics manuscript no. exor_plates_lang_2 © ESO 2017 March 8, 2017

Investigating the past history of EXors: the cases of V1118 Ori, V1143 Ori, and NY Ori

R. Jurdana-Šepić^1 , U. Munari^2, S. Antoniucci^3 , T. Giannini^3, G. Li Causi^{3, 4}, D. Lorenzetti^3

1 Physics Department, University of Rijeka, Radmile Matejčić, 51000 Rijeka, Croatia 2 INAF - Osservatorio Astronomico di Padova - via dell’Osservatorio 8, Asiago(VI) 36012, Italy 3 INAF - Osservatorio Astronomico di Roma - Via Frascati, 33 - Monte Porzio Catone 00078, Italy 4 INAF - Istituto di Astrofisica e Planetologia Spaziali - Via Fosso del Cavaliere, 100 - Roma 00133, Italy

Received date / Accepted date

ABSTRACT

Context. EXor objects are young variables that show episodic variations of brightness commonly associated to enhanced accretion outbursts.

Aims. With the aim of investigating the long-term photometric behaviour of a few EXor sources, we present here data from the archival plates of the Asiago Observatory, showing the Orion field where the three EXors V1118, V1143, and NY are located. Methods. A total of 484 plates were investigated, providing a total of more than 1000 magnitudes for the three stars, which cover a period of about 35 yrs between 1959 to 1993. We then compared our data with literature data.

Results. Apart from a newly discovered flare-up of V1118, we identify the same outbursts already known, but we provide two added values: (i) a long-term sampling of the quiescence phase; and (ii) repeated multi-colour observations (BVRI bands). The former allows us to give a reliable characterisation of the quiescence, which represents a unique reference for studies that will analyze future outbursts and the physical changes induced by these events. The latter is useful for confirming whether the intermittent increases of brightness are accretion-driven (as in the case of V1118), or extinction-driven (as in the case of V1143). Accordingly, doubts arise about the V1143 classification as a pure EXor object. Finally, although our plates do not separate NY Ori and the star very close to it, they indicate that this EXor did not undergo any major outbursts during our 40 yrs of monitoring.

Key words. Stars: pre-main sequence – Stars: variables – Astronomical Data Bases: catalogues – Stars: individual: NY Ori – Stars: individual: V1118 Ori – Stars: individual: V1143 Ori

1. Introduction

Among the low-mass protostars, the EXor-type objects (hereafter EXor - Herbig 1989) are considered a peculiar sub-class of the classical T Tauri stars (CTTS). These sources undergo episodic outbursts of brightness (typically of three to five magnitudes at optical wavelengths) caused by sudden variations of the mass accretion rate that obeys the magnetospheric accretion rules (Shu et al. 1994). At the moment, the known EXors are only few tens (Audard et al. 2014) usually discovered by chance. Indeed, all the long term photometric surveys carried out so far on CTTS samples confirm that they present, on average, small amplitude variations (typically^<_∼1 mag). These results tend to support a certain peculiarity of the EXors, but to what extent their accretion events are unfrequent manifestations of a common phenomenology (Lorenzetti et al 2012) is not firmly ascertained.

EXors present short outburst (months–one year) with a recurrence time of years, associated with accretion rates of the order of 10^{−6}-10^{−7} M_⊙ yr^{−1}, and characterised by emission-line spectra (e.g. Herbig 2008; Lorenzetti et al. 2009; Kóspál et al. 2011; Sicilia-Aguilar et al. 2012; Antoniucci et al. 2013, Antoniucci et al. 2014). Such features, and in particular the burst cadence, make EXors the ideal candidates for a long-term monitoring, which should be effective in comparing the properties

Send offprint requests to: Dario Lorenzetti, e-mail: dario.lorenzetti@oa-roma.inaf.it of several subsequent events and evidence their similarities or differences. Following this observational approach, compelling constraints can be provided for the models currently available. Indeed, the EXors phenomenology has been so far interpreted by borrowing the theoretical approaches developed to study the FUor events (Hartmann & Kenyon 1985), but a detailed model of the disk structure and its evolution does not exist yet for EXors stars. D’Angelo & Spruit (2010) provided quantitative predictions for the episodic accretion of piled-up material at the inner edge of the disk that, however, are largely incompatible with the observations. Hence, the mechanism responsible for the onset of EXor accretion outbursts remains unknown to date. Two proposed scenarios involve essentially either disk instabilities (gravitational - e.g. Adams & Lin 1993, or thermal - e.g. Bell & Lin 1994) or perturbation by an external body (a close encounter in a binary system - e.g. Bonnell & Bastien 1992, or presence of a massive planet - e.g. Lodato & Clarke 2004).

The young star V1118 Ori, one of the classical EXor objects, represents a very suitable target for such a kind of long term monitoring. During its recent history V1118 Ori underwent six documented outbursts, each lasting a couple of years (1982-84, 1988-90, 1992-94, 1997-98, 2004-06, 2015-on going). Account for the first five events is given in Parsamian et al. (1993), García García & Parsamian (2000), Herbig (2008) and references therein, Audard et al. (2005, 2010), and Lorenzetti et al. (2006, 2007). The properties shown during the long quiescence period before the last eruption, firstly detected around Sept. 2015, are

Article number, page 1 of 13

A&A proofs: manuscript no. exor_plates_lang_2

described in Lorenzetti et al. (2015), Giannini et al. (2016), and Giannini et al. (in preparation). In this latter paper, a comparison of all the recent outbursts is presented, with the aim of investigating if any periodicity is recognizable among the recurrent events. However, so far only a couple of outbursts have been sampled at an accuracy level that allows us to have some indication on this aspect. A firm ascertainment of the existence of a periodicity could speak in favour of a disk instability generated by an external body as the most likely mechanism for the mass accretion variations. To this end, we have investigated the optical plates collected by the Asiago (Italy) Schmidt telescopes during a timespan of about 40 years (1958-1998), which are able to provide the most accurate long-term light curve of V1118 Ori available before the advent of both CCD and near-IR arrays.

Beside V1118 Ori, two other EXors, namely V1143 Ori and NY Ori, are also located in the Orion Nebula Cluster (ONC), thus appearing in the same archival plates of the Asiago observatory. By analysing these large number of plates we have therefore the great advantage of investigating the past history of two additional systems with the same method and accuracy. V1143 is a very active variable (see Herbig 2008, and references therein) and presents ranges of photometric fluctuations of ∼19-14.3 mag and 16.7-13.5 mag in B/pg and V/vs bands, respectively. NY Ori (= Parenago 2119) is a young star located 5.5 arcsec SE of the much optically brighter source V566 Ori (= Parenago 2118). Its photometric history and variability is documented (Herbig 2008) by a series of plates collected during short periods (1905-19; 1948-49; 1973) with very sparse and occasional sampling, which provide a range of variability in the visual band between 13.3 and 16 mag. A previous plate analysis of V1118 Ori and V1143 Ori was presented by Paul et al. (1995), but the extremely low number of resulting photometric data points (less than ten in 40 years), hampers a proper time coverage.

In any case, the relevance of the plates analysis for studying the eruptive variables is irrefutable, as recently demonstrated for the EXor GM Cep (Xiao et al. 2010) and the FUor V960 Mon (Jurdana-Šepić & Munari, 2016). Noticeably, the chance of studying the historical light curves of EXors located in the Orion nebula is offered uniquely by the Asiago plates. Indeed, other remarkable archives (e.g. Harvard and Sonneberg) present some difficulties in this respect: firstly, they are not as much deep to investigate the quiescence phase; secondly, they cover almost exclusively the B or blue-unfiltered bands; thirdly, they have been obtained with short focal length astrographs that typically squeeze the plate scale making indistinguishable the stars inside the nebula. To our best knowledge, plate-based monitoring of other EXors as faint as V1118 Ori is not available in literature. The features mentioned above suggest that the Asiago archive might be a reference source for investigating the past history of both recently discovered EXors and those that will be discovered in the next future.

The present paper is organized as follows: the adopted method and the obtained BVRI photometry are presented in Sections 2 and 3. Section 4 gives the analysis and discussion of the obtained results, while our concluding remarks are given in Sect. 5. 2. Data acquisition

2.1. Archive plates

Two Schmidt telescopes are operated at the Asiago observatory. The smaller one (SP: 40/50 cm, 100 cm focal length) collected 20,417 plates between 1958 to 1992 (covering a circular area 5^∘ in diameter), and the larger one (SG: 67/92 cm, 208 cm focal length) 18,811 plates from 1965 to 1998 (imaging a 5^∘×5^∘ portion of the sky). The Asiago Schmidt plate collection thus span 40 years, covering in particular the Menzel Gap during which acquisition of photographic plates was temporarily halted at Harvard Observatory. Since the 1990s, large format CCD cameras have replaced photographic plates as detectors, with the plates preserved in controlled conditions.

The Asiago Schmidt plates have not been exposed over the whole sky but instead on selected targets (in particular star forming regions, clusters of galaxies, galaxies of the Local Group), for which therefore exist a long record of observations. The Orion nebula - around which our targets are located - has been a favoured hit. Nearly all plates from both telescopes go very deep, B∼18.5 and B∼17.8 mag being the typical limiting magnitude for blue sensitive plates exposed with the SG and SP telescope, respectively.

The majority of the plates were exposed as 103a-O + GG13, 103a-E + RG1 and IN + RG5 combinations of Kodak plates and Schott astronomical filters, matching the prescription for the Johnson-Cousins B, R_C and I_C photometric bands (Moro& Munari 2000), respectively. A large number of plates were exposed as unfiltered 103a-O, thus covering both the Johnson B and U bands thanks to the high ultraviolet transparency of the UBK-7 corrector plates at both Schmidt telescopes. For low temperature and/or reddened objects, especially if they were observed at large airmass, the amount of proper U-band photons collected by an unfiltered 103a-O plate is however minimal compared to those arriving through the B-band portion of the interval of sensitivity of 103a-O emulsion. In such conditions (and provided that the selected comparison stars are themselves of low temperature and/or high reddening), 103a-O + GG13 pairs and unfiltered 103a-O plates are almost equally well replicating the standard Johnson B band (Munari & Dallaporta 2014).

The plates in the proper Johnson V band obtained as 103 a-D + GG14 combination, are low in number, and equally infrequent are unfiltered panchromatic plates as 103 a-G, 103a-D, Tri-X and Pan-Roy. In the present paper, these unfiltered panchromatic plates have been treated as V-band plates (even if they lack the coupling to a high-pass filter such as GG11 or GG14) because of the low temperature and reddening of our targets and generally the high airmass (∼1.8) of the corresponding observations which prevent U− and B−band photons to be collected in any significant number by unfiltered panchromatic plates.

2.2. Brightness measurement

To derive the brightness of our targets, we compared them at a high quality Zeiss microscope against a local photometric sequence established around each target. Such a sequence, composed of stars of roughly the same colour as the variable and widely distributed in magnitude so to cover both quiescence and outburst states, was extracted primarily from the APASS BVg^′r^′i^′ all-sky survey (Henden et al. 2012, Henden & Munari 2014), with porting to Landolt R_C and I_C bands following Munari (2012) and Munari et al. (2014) prescriptions. To evaluate the measurement errors a number of plates were re-measured after several days when all memories had vanished from the observer, and independently by different observers. The typical error is 0.1 mag, comparable to that intrinsic to the photographic plate itself so that the observer adds little to it. When a larger error is reported, that is usually associated to presence of a fogged background, a trailed guiding, or poor seeing.

Article number, page 2 of 13

Jurdana-Šepić et al.: Past history of EXors

Fig. 1. BVRI light curves of V1118 Ori. Upper limits are given as solid black triangles. In the two bottom panels (B and V), blue vertical bars indicate the dates when the nebular background around V1118 Ori was too bright (see text Sect. 2.2). Green points refer to literature measurements reported by Parsamian et al. (1993) and García García & Parsamian (2000).

A total of 484 plates imaging the Orion nebula were retrieved from the Asiago Schmidt plate archive. After inspection, 44 of them were rejected for various reasons (too short exposures, unsuitable emulsion or filter combinations, damages during development or storing, etc.), leaving a total of 440 plates ready for measurement, spanning the time interval from Dec 7, 1958 to Dec 12, 1993. The results are given in Table 1 where the columns provide date/UT/HJD of observation, photographic emulsions and filters, plate number and telescope, the estimated magnitude or plate limit, and the corresponding errors. When the variable is too faint to be detected, the limiting magnitude is listed as that of the faintest of the stars in the comparison sequence which is clearly visible.

The faint variables V1118 Ori and V1143 Ori are superimposed to the Orion nebula, which greatly disturbs their detection and measurement. All emission from the nebula come from few extremely intense emission lines, mainly [OIII] 4959, 5007 Å and the [NII]+Hα complex. A minimal variance in the transmission of the emulsion+filter combination at these wavelengths causes large changes in the brightness background. For this reason, in a significant number of plates the nebular background around V1118 Ori is so bright that it is impossible to estimate the brightness in quiescence of such a faint variable star. For these plates (identified in Table 1 and whose date of observation is depicted in Figure 1) it was only possible to exclude that the target was at that time going through a bright outburst. NY Ori is a member of a close optical pair with brighter 2MASS J05353579-0512205 (=V566 Ori) at 5 arcsec distance. On the Palomar Schmidt plates they can be percept as a heavily blended pair, with the two stars not measurable separately, while at the shorter focal length of the Asiago Schmidt telescopes the pair is merged into the image of a unresolved single star. Therefore the measurements of NY Ori reported in Table 1 refer to the combined pair of stars.

3. Historical light curves

The BVRI light curves of V1118, V1143, and NY Ori corresponding to their plate photometry given in Table 1, are given in Figures 1, 2, and 3, respectively. In Table 2 some statistics are provided for the three sources in each band, namely the number of observations, the median value, (basically the quiescence magnitude), together with the standard deviation of the data points, and the peak brightness. Notably, we provide one of the best sampled data set ever obtained of the quiescent phase of the investigated sources. Indeed, albeit observations are concen-

Article number, page 3 of 13

A&A proofs: manuscript no. exor_plates_lang_2

Fig. 2. BVRI light curves of V1143 Ori. Upper limits are given as solid black triangles. Green points are measurements taken from by Mampaso & Parsamian (1995).

trated within the seasonal periods of observability, their number is significantly high (between 50 and 100) in many cases, allowing us to infer meaningful averaged values for the quiescence level. Determining this level is fundamental to have a solid reference for future observations that will analyse new outbursts and investigate the physical changes induced on the system by these enhanced accretion events. Finally, we note how these sources (especially V1118 and V1143) present, in quiescence, a level of modest variability. This may be quantified by considering the standard deviation of the measurements (0.2-0.4 mag), which is comparable with that of the classical T Tauri (CTTS).

4. Analysis and discussion

4.1. V1118 Ori

Examining its light curve in R and I bands, depicted in Figure 1, three major (Δm^>_∼ 2 mag) flare-up events are recognizable: a first one in 1966 February (R band), a second one in 1983 November (R, I bands), and a third one in 1989 February (B, R, and I bands). This first event is mentioned here for the first time; however, as indicated in Table 1 (HJD 2439172), it was a sudden flaring more than an EXor typical outburst, since the R band brightness increased by 2.5 mag in 40 minutes, representing a very fast onset of a flare lasting less than one months (see I band values in the same Table). Similar episodes, usually associated with very active chromospheres and hence detected at higher energies, are not commonly observed in either this source or other EXors, but, unfortunately, this episode has been sampled only in the R band, thus preventing any colour analysis (see below).

However, it apparently marks the beginning of a long quiescence period from 1966 to 1981, as testified by the subsequent monitoring in the I band, whose temporal coverage suggests the absence of potential outbursts lasting more than 1 yr. Two observational gaps, slightly longer than 1 yr, indeed exist in 1973-74 and 1975-76 (see Table 1), so we cannot exclude that an outburst might have occurred during one or both these observational gaps. Remarkably, this quiescence period (about 15 yrs) would be the longest known so far (Lorenzetti et al. 2015), thus its relevance is twofold: firstly, it poses a compelling constraint on the existence of a recurrent interval between two bursts; secondly, it allows us to define a reliable quiescent value of I = 14.6 mag (see Table 2). The second and third events are already mentioned in the literature by Parsamian et al. (1993), García García & Parsamian (2000), who gave only the B and V magnitudes: our photometry is in agreement with their values, but provides, for the first time, the R and I magnitudes, as well. In particular for the third

Article number, page 4 of 13

Jurdana-Šepić et al.: Past history of EXors

Table 1. BVRI plate photometry of NY, V1143, V1118 in Orion. Columns provide: date and central UT of any exposure, plate emulsion, the adopted filter, the telescope, the plate number, and the magnitude derived for the three sources with the estimated error (see text for further details). For V1118 Ori, the asterisks indicate plates for which it was only possible to rule out that the source was going through a bright outburst.

NY Ori V1143 Ori V1118 Ori HJD date UT emulsion filter tel plate mag error mag error mag error 2436545.43698 1958-12-07 22:22 103 a-E RG 1 SP 59 R = 10.12 0.10 R = 15.56 0.10 R = 15.13 0.20 2436567.31360 1958-12-29 19:25 103 a-O ... SP 66 B = 10.97 0.10 B >15.86 0.10 ∗ 2436570.29404 1959-01-01 18:57 103 a-O ... SP 70 B = 10.83 0.10 B >15.86 0.10 ∗ 2436570.36626 1959-01-01 20:41 103 a-E RG 1 SP 73 R = 10.12 0.10 R >14.74 0.10 R = 15.13 0.20 2436572.31340 1959-01-03 19:25 103 a-O ... SP 78 B = 10.90 0.10 B >15.86 0.10 ∗ 2436573.34808 1959-01-04 20:15 103 a-O ... SP 81 B = 10.90 0.10 B >17.15 0.10 ∗ 2436578.30825 1959-01-09 19:18 103 a-O ... SP 92 B = 10.90 0.10 B >17.15 0.10 ∗ 2436579.32278 1959-01-10 19:39 103 a-O ... SP 99 B = 10.90 0.10 B >17.15 0.10 ∗ 2436581.30115 1959-01-12 19:08 103 a-O ... SP 113 B = 10.90 0.10 B >17.15 0.10 ∗ 2436582.38858 1959-01-13 21:14 103 a-O ... SP 127 B = 10.90 0.10 B >17.15 0.10 ∗ 2436585.40993 1959-01-16 21:45 103 a-O ... SP 133 B = 10.90 0.10 B >15.86 0.10 ∗ 2436586.45987 1959-01-17 22:57 103 a-O ... SP 142 B = 10.90 0.10 B >17.15 0.10 ∗ 2436595.25789 1959-01-26 18:07 103 a-O ... SP 146 B = 10.90 0.10 B >17.15 0.10 ∗ 2436596.30574 1959-01-27 19:16 103 a-O ... SP 151 B = 10.97 0.10 B >17.15 0.10 ∗ 2436597.33691 1959-01-28 20:01 103 a-O ... SP 156 B = 10.97 0.10 B >17.15 0.10 ∗ 2436598.29448 1959-01-29 19:00 103 a-O ... SP 159 B >17.15 0.10 ∗ 2436599.29232 1959-01-30 18:57 103 a-O ... SP 166 B = 11.01 0.10 B >17.15 0.10 ∗ 2436600.29919 1959-01-31 19:07 103 a-O ... SP 174 B = 10.90 0.10 ∗ 2436608.33120 1959-02-08 19:54 103 a-O ... SP 205 B = 11.05 0.10 B = 17.40 0.10 ∗ 2436608.37217 1959-02-08 20:53 103 a-O ... SP 207 B = 10.90 0.10 B >17.15 0.10 ∗ 2436609.32834 1959-02-09 19:50 103 a-O ... SP 212 B = 11.01 0.10 B >17.15 0.10 ∗ 2436610.30326 1959-02-10 19:14 103 a-O ... SP 219 B = 11.01 0.10 B >17.15 0.10 ∗ 2436611.31498 1959-02-11 19:31 103 a-O ... SP 226 B = 11.10 0.10 B >17.15 0.10 ∗ 2436613.36620 1959-02-13 20:45 103 a-O ... SP 240 B = 10.90 0.10 B >15.86 0.10 ∗ 2436614.37653 1959-02-14 21:00 103 a-E RG 1 SP 244 R = 10.12 0.10 R = 15.56 0.10 R = 15.13 0.20 2436625.28184 1959-02-25 18:45 103 a-O ... SP 248 B = 10.90 0.10 B >15.86 0.10 ∗ 2436626.28383 1959-02-26 18:48 103 a-O ... SP 251 B = 11.01 0.10 B >17.15 0.10 ∗ 2436627.27888 1959-02-27 18:41 103 a-O ... SP 257 B = 10.97 0.10 B >17.15 0.10 ∗ 2436628.27810 1959-02-28 18:40 103 a-O ... SP 264 B = 10.97 0.10 B >17.15 0.10 ∗ 2436628.31421 1959-02-28 19:32 103 a-O ... SP 266 B = 11.01 0.10 B = 17.46 0.10 ∗ 2436629.27662 1959-03-01 18:38 103 a-O ... SP 271 B = 10.97 0.10 B = 17.46 0.10 ∗ 2436630.27098 1959-03-02 18:30 103 a-O ... SP 278 B = 10.90 0.10 B = 17.46 0.10 ∗ 2436641.31236 1959-03-13 19:31 103 a-D ... SP 284 B = 10.90 0.10 B >15.86 0.10 ∗ 2436642.32061 1959-03-14 19:43 103 a-O ... SP 287 B = 10.90 0.10 B >15.86 0.10 ∗ 2436642.35811 1959-03-14 20:37 103 a-O ... SP 289 B = 10.83 0.10 ∗ 2436660.30383 1959-04-01 19:21 103 a-E RG 1 SP 293 R = 9.89 0.10 R >15.46 0.10 R >15.13 0.10 2436661.28431 1959-04-02 18:53 103 a-E RG 1 SP 297 R = 10.12 0.10 R >14.16 0.10 R >15.13 0.10 2436851.52152 1959-10-10 00:27 103 a-O ... SP 532 B = 10.83 0.10 B >16.24 0.10 ∗ 2436851.54861 1959-10-10 01:06 IN Sen RG 5 SP 533 I = 9.56 0.10 I = 14.28 0.10 I = 14.62 0.10 2436853.52722 1959-10-12 00:35 103 a-O ... SP 538 B = 10.83 0.10 2436853.54320 1959-10-12 00:58 IN Sen RG 5 SP 539 I = 9.56 0.10 I >12.79 0.10 2436881.67812 1959-11-09 04:10 103 a-E RG 1 SP 591 R = 10.12 0.10 R >15.46 0.10 R >15.13 0.10 2436882.58857 1959-11-10 02:01 103 a-E RG 1 SP 594 R = 10.12 0.10 R = 15.56 0.10 R = 15.13 0.20 2436925.35133 1959-12-22 20:19 103 a-G ... SP 633 V = 10.45 0.10 V >15.94 0.10 ∗ 2436931.38656 1959-12-28 21:10 103 a-G ... SP 644 V = 10.45 0.10 V >15.94 0.10 ∗ 2436933.36219 1959-12-30 20:35 103 a-O ... SP 652 B = 10.90 0.10 B >15.86 0.10 ∗ 2436937.39119 1960-01-03 21:17 103 a-O ... SP 667 B = 10.69 0.10 ∗ 2436938.42031 1960-01-04 21:59 103 a-O ... SP 671 B = 10.83 0.10 ∗ 2436940.49521 1960-01-06 23:47 103 a-O ... SP 678 B = 10.83 0.10 ∗ 2436950.29954 1960-01-16 19:06 103 a-O ... SP 686 B = 10.83 0.10 ∗ 2436954.39442 1960-01-20 21:23 103 a-O ... SP 699 B = 10.83 0.10 B >15.86 0.10 ∗ 2436981.25278 1960-02-16 18:02 103 a-O ... SP 734 B = 10.83 0.10 B >15.86 0.10 ∗ 2436993.27812 1960-02-28 18:40 103 a-O ... SP 761 B = 10.83 0.10 ∗ 2436993.30590 1960-02-28 19:20 103 a-O ... SP 763 B = 10.83 0.10 B >16.24 0.10 ∗ 2437012.29520 1960-03-18 19:07 103 a-O ... SP 782 B = 10.83 0.10 B >16.24 0.10 ∗ 2437013.30136 1960-03-19 19:16 103 a-O ... SP 784 B = 10.83 0.10 B >16.24 0.10 ∗ 2437013.31595 1960-03-19 19:37 103 a-O ... SP 785 B = 10.83 0.10 B >16.24 0.10 ∗ 2437017.29200 1960-03-23 19:03 103 a-O ... SP 800 B = 10.83 0.10 B >16.24 0.10 ∗ 2437238.65414 1960-10-31 03:36 103 a-O Liq SP 1138 B = 10.76 0.20 ∗ 2437255.49507 1960-11-16 23:46 103 a-O Liq SP 1170 B = 10.76 0.20 2437256.57358 1960-11-18 01:39 103 a-G Liq SP 1181 V = 10.35 0.20 ∗ 2437259.56531 1960-11-21 01:27 103 a-O ... SP 1198 B = 11.05 0.10 B >17.15 0.10 ∗ 2437293.39153 1960-12-24 21:17 103 a-E RG 1 SP 1235 R = 10.12 0.10 R = 15.46 0.10 R >15.13 0.10 2437307.37846 1961-01-07 20:59 103 a-E RG 1 SP 1263 R = 10.12 0.10 R = 15.46 0.10 R >15.13 0.10 2437309.34017 1961-01-09 20:04 103 a-G Liq SP 1268 V = 10.45 0.20 ∗ 2437309.35544 1961-01-09 20:26 103 a-G Liq SP 1269 V = 10.42 0.20 ∗ 2437316.30227 1961-01-16 19:10 103 a-O Liq SP 1284 B = 10.76 0.20 2437316.35088 1961-01-16 20:20 103 a-O Liq SP 1285 B = 10.69 0.20 2437317.41748 1961-01-17 21:56 103 a-E RG 1 SP 1297 R = 10.14 0.10 R = 15.40 0.10 R >15.13 0.10

Article number, page 5 of 13

A&A proofs: manuscript no. exor_plates_lang_2

Table 1. Continued.

NY Ori V1143 Ori V1118 Ori HJD date UT emulsion filter tel plate mag error mag error mag error 2437319.31944 1961-01-19 19:35 103 a-O Liq SP 1316 B = 10.69 0.20 ∗ 2437319.39444 1961-01-19 21:23 103 a-O Liq SP 1318 B = 10.69 0.20 ∗ 2437319.44582 1961-01-19 22:37 103 a-E RG 1 SP 1319 R = 10.15 0.10 R = 15.61 0.10 R >13.42 0.20 2437336.32237 1961-02-05 19:41 103 a-E RG 1 SP 1354 R = 10.15 0.10 R = 15.56 0.10 R >15.13 0.10 2437339.32144 1961-02-08 19:40 103 a-E RG 1 SP 1372 R = 10.15 0.10 R = 15.56 0.10 R >15.13 0.10 2437342.30452 1961-02-11 19:16 103 a-E RG 1 SP 1397 R = 10.15 0.10 R = 15.61 0.10 R >15.13 0.10 2437347.29230 1961-02-16 18:59 103 a-E RG 1 SP 1445 R = 10.15 0.10 R = 15.61 0.10 R >15.13 0.10 2437349.28240 1961-02-18 18:45 103 a-E RG 1 SP 1466 R = 10.15 0.10 R = 15.40 0.10 R >15.13 0.10 2437363.27909 1961-03-04 18:42 IN Sen RG 5 SP 1505 I = 9.74 0.10 I = 13.91 0.10 I = 14.56 0.10 2437364.31650 1961-03-05 19:36 IN Sen RG 5 SP 1507 I = 9.74 0.10 I = 14.11 0.10 I = 14.56 0.10 2437365.27544 1961-03-06 18:37 IN Sen RG 5 SP 1511 I = 9.74 0.10 I = 14.11 0.10 I = 14.04 0.10 2437366.29063 1961-03-07 18:59 IN Sen RG 5 SP 1516 I = 9.56 0.10 I = 14.11 0.10 I >14.22 0.10 2437367.27943 1961-03-08 18:43 IN Sen RG 5 SP 1522 I = 9.56 0.10 I = 14.28 0.10 I = 14.62 0.10 2437369.27925 1961-03-10 18:43 IN Sen RG 5 SP 1538 I = 9.74 0.10 I >13.57 0.10 I >14.22 0.10 2437371.27838 1961-03-12 18:42 IN Sen RG 5 SP 1558 I = 9.74 0.10 I = 14.11 0.10 I = 14.79 0.10 2437561.58239 1961-09-19 01:57 103 a-O ... SP 2090 B = 10.76 0.10 B >16.24 0.10 ∗ 2437563.61242 1961-09-21 02:40 103 a-O ... SP 2108 B = 10.76 0.10 B >16.24 0.10 ∗ 2438015.36744 1962-12-16 20:42 103 a-O Liq SP 3455 B = 10.76 0.20 2438044.29200 1963-01-14 18:55 PAN.ROY ... SP 3566 V = 10.38 0.10 V = 16.33 0.10 ∗ 2438045.29333 1963-01-15 18:57 PAN.ROY ... SP 3575 V = 10.49 0.10 V >16.71 0.10 ∗ 2438046.30369 1963-01-16 19:12 PAN.ROY ... SP 3586 V = 10.42 0.10 ∗ 2438049.38961 1963-01-19 21:16 PAN.ROY ... SP 3593 V = 10.52 0.10 V = 16.33 0.10 ∗ 2438049.50765 1963-01-20 00:06 PAN.ROY ... SP 3599 V = 10.45 0.10 V = 16.71 0.10 ∗ 2438050.30205 1963-01-20 19:10 PAN.ROY ... SP 3607 V = 10.45 0.10 V = 16.33 0.10 ∗ 2438050.48120 1963-01-20 23:28 PAN.ROY ... SP 3613 V = 10.45 0.10 V >16.71 0.10 ∗ 2438052.29636 1963-01-22 19:02 PAN.ROY ... SP 3621 V = 10.45 0.10 V = 16.71 0.10 ∗ 2438054.29206 1963-01-24 18:56 PAN.ROY ... SP 3649 V = 10.52 0.10 V = 16.76 0.10 ∗ 2438055.28782 1963-01-25 18:50 PAN.ROY ... SP 3666 V = 10.52 0.10 V = 16.76 0.10 ∗ 2438055.46836 1963-01-25 23:10 PAN.ROY ... SP 3674 V = 10.42 0.10 V = 16.33 0.10 ∗ 2438057.29254 1963-01-27 18:57 PAN.ROY ... SP 3696 V = 10.45 0.10 V >16.71 0.10 ∗ 2438058.27372 1963-01-28 18:30 PAN.ROY ... SP 3711 V = 10.45 0.10 V = 16.71 0.10 ∗ 2438058.44454 1963-01-28 22:36 PAN.ROY ... SP 3717 V = 10.45 0.10 2438071.25187 1963-02-10 18:00 PAN.ROY ... SP 3728 V = 10.42 0.10 2438081.33782 1963-02-20 20:05 PAN.ROY ... SP 3735 V = 10.52 0.10 V = 16.76 0.10 ∗ 2438086.27489 1963-02-25 18:35 PAN.ROY ... SP 3768 V = 10.49 0.10 V >15.94 0.10 ∗ 2438101.27773 1963-03-12 18:41 PAN.ROY ... SP 3851 V = 10.45 0.10 V >15.94 0.10 ∗ 2438106.29813 1963-03-17 19:11 PAN.ROY ... SP 3861 V = 10.42 0.10 V = 16.71 0.10 ∗ 2438113.28642 1963-03-24 18:55 PAN.ROY ... SP 3871 V = 10.42 0.10 V >15.94 0.10 ∗ 2438321.53951 1963-10-19 00:52 PAN.ROY ... SP 4155 V = 10.42 0.10 V = 16.76 0.10 ∗ 2438321.57215 1963-10-19 01:39 PAN.ROY ... SP 4157 V = 10.42 0.10 V = 15.82 0.10 ∗ 2438324.57303 1963-10-22 01:40 PAN.ROY ... SP 4185 V = 10.45 0.10 V = 15.82 0.10 ∗ 2438328.61703 1963-10-26 02:43 PAN.ROY ... SP 4208 V = 10.45 0.10 V = 16.76 0.10 ∗ 2438331.58386 1963-10-29 01:55 PAN.ROY ... SP 4214 V = 10.52 0.10 V = 16.56 0.10 ∗ 2438352.59372 1963-11-19 02:08 PAN.ROY ... SP 4265 V = 10.45 0.10 V = 16.71 0.10 ∗ 2438357.51883 1963-11-24 00:20 PAN.ROY ... SP 4290 V = 10.45 0.10 V >16.71 0.10 ∗ 2438376.40986 1963-12-12 21:43 PAN.ROY ... SP 4317 V = 10.45 0.10 V = 16.76 0.10 ∗ 2438376.43902 1963-12-12 22:25 PAN.ROY ... SP 4319 V = 10.45 0.10 V = 16.76 0.10 ∗ 2438381.41395 1963-12-17 21:49 PAN.ROY ... SP 4337 V = 10.45 0.10 V = 16.71 0.10 ∗ 2438387.46658 1963-12-23 23:05 PAN.ROY ... SP 4363 V = 10.45 0.10 V = 16.71 0.10 ∗ 2438398.30508 1964-01-03 19:13 PAN.ROY ... SP 4380 V = 10.42 0.10 V = 16.71 0.10 ∗ 2438401.32091 1964-01-06 19:36 PAN.ROY ... SP 4416 V = 10.49 0.10 V = 16.71 0.10 ∗ 2438403.32915 1964-01-08 19:48 PAN.ROY ... SP 4431 V = 10.45 0.10 V = 16.71 0.10 ∗ 2438404.37493 1964-01-09 20:54 PAN.ROY ... SP 4453 V = 10.52 0.10 V = 16.48 0.10 ∗ 2438407.42615 1964-01-12 22:08 PAN.ROY ... SP 4465 V = 10.52 0.10 V = 16.48 0.10 ∗ 2438409.41562 1964-01-14 21:53 PAN.ROY ... SP 4485 V = 10.45 0.10 V = 16.71 0.10 ∗ 2438412.33489 1964-01-17 19:57 PAN.ROY ... SP 4491 V = 10.49 0.10 V = 16.71 0.10 ∗ 2438412.37239 1964-01-17 20:51 PAN.ROY ... SP 4494 V = 10.52 0.10 V = 16.48 0.10 ∗ 2438413.34524 1964-01-18 20:12 PAN.ROY ... SP 4513 V = 10.45 0.10 V = 16.84 0.10 ∗ 2438415.46941 1964-01-20 23:11 PAN.ROY ... SP 4540 V = 10.45 0.10 V = 16.63 0.10 ∗ 2438416.47907 1964-01-21 23:25 PAN.ROY ... SP 4542 V = 10.52 0.10 V = 16.71 0.10 ∗ 2438427.28594 1964-02-01 18:48 PAN.ROY ... SP 4557 V = 10.45 0.10 V >16.71 0.10 ∗ 2438427.31233 1964-02-01 19:26 PAN.ROY ... SP 4559 V = 10.45 0.10 ∗ 2438428.31156 1964-02-02 19:25 PAN.ROY ... SP 4568 V = 10.45 0.10 V >15.94 0.10 ∗ 2438430.33223 1964-02-04 19:55 PAN.ROY ... SP 4579 V = 10.45 0.10 V = 16.84 0.10 ∗ 2438433.41671 1964-02-07 21:57 PAN.ROY ... SP 4618 V = 10.49 0.10 V = 16.76 0.10 ∗ 2438434.33538 1964-02-08 20:00 PAN.ROY ... SP 4624 V = 10.49 0.10 V = 16.76 0.10 ∗ 2438436.30814 1964-02-10 19:21 PAN.ROY ... SP 4636 V = 10.49 0.10 V = 16.76 0.10 ∗ 2438436.32064 1964-02-10 19:39 PAN.ROY ... SP 4637 V = 10.45 0.10 V = 16.84 0.10 ∗ 2438436.34633 1964-02-10 20:16 PAN.ROY ... SP 4639 V = 10.52 0.10 V = 16.84 0.10 ∗ 2438464.29182 1964-03-09 19:01 PAN.ROY ... SP 4691 V = 10.52 0.10 V = 16.71 0.10 ∗ 2438760.38507 1964-12-30 21:08 103 a-O ... SP 5143 B = 11.01 0.10 B >17.46 0.10 ∗ 2438761.31698 1964-12-31 19:30 103 a-O ... SP 5157 B = 10.90 0.10 B >17.46 0.10 ∗ 2438767.37851 1965-01-06 20:59 103 a-O ... SP 5201 V = 10.45 0.10 V >15.94 0.10 ∗

Article number, page 6 of 13

Jurdana-Šepić et al.: Past history of EXors

Table 1. Continued.

NY Ori V1143 Ori V1118 Ori HJD date UT emulsion filter tel plate mag error mag error mag error 2438769.39855 1965-01-08 21:28 103 a-O ... SP 5207 V = 10.45 0.10 V >15.94 0.10 ∗ 2438771.49705 1965-01-10 23:50 103 a-O ... SP 5214 V = 10.45 0.10 ∗ 2438782.33389 1965-01-21 19:56 103 a-O ... SP 5227 V = 10.45 0.10 V >15.94 0.10 V >15.81 0.10 2438784.38236 1965-01-23 21:06 103 a-O ... SP 5235 V = 10.45 0.10 V >15.94 0.10 V >15.81 0.10 2438785.40660 1965-01-24 21:41 103 a-O ... SP 5251 V = 10.45 0.10 V >15.94 0.10 V >15.81 0.10 2438786.36000 1965-01-25 20:34 103 a-O ... SP 5260 V = 10.45 0.10 V >14.79 0.10 V >15.81 0.10 2438794.30386 1965-02-02 19:14 PAN.ROY ... SP 5279 V = 10.45 0.10 V = 16.33 0.10 V >15.81 0.10 2438797.37445 1965-02-05 20:56 PAN.ROY ... SP 5308 V = 10.52 0.10 V = 16.33 0.10 V >15.81 0.10 2438797.38834 1965-02-05 21:16 PAN.ROY ... SP 5309 V = 10.45 0.10 V >16.71 0.10 V >15.81 0.10 2438810.28865 1965-02-18 18:54 PAN.ROY ... SP 5329 V = 10.45 0.10 V >16.71 0.10 V >15.81 0.10 2438811.29412 1965-02-19 19:02 PAN.ROY ... SP 5335 V = 10.45 0.10 V >15.32 0.10 V >16.19 0.10 2438814.30358 1965-02-22 19:16 103 a-O ... SP 5351 V = 10.45 0.10 V >15.94 0.10 V >15.81 0.10 2438844.28291 1965-03-24 18:50 103 a-O ... SP 5364 V = 10.45 0.10 2438847.28960 1965-03-27 19:00 103 a-O ... SP 5397 V = 10.45 0.10 V >14.79 0.10 ∗ 2439037.56487 1965-10-04 01:30 103 a-O ... SG 5 B = 11.10 0.10 B = 17.50 0.10 ∗ 2439038.57605 1965-10-05 01:46 103 a-O ... SG 9 B = 10.90 0.10 B = 17.55 0.10 ∗ 2439062.59430 1965-10-29 02:10 103 a-O ... SG 24 B = 11.01 0.10 B = 17.47 0.10 ∗ 2439084.51667 1965-11-20 00:17 103 a-O ... SG 33 B = 11.05 0.10 B >17.51 0.10 ∗ 2439086.45908 1965-11-21 22:54 103 a-O ... SG 40 B = 11.05 0.10 B >17.51 0.10 ∗ 2439089.44802 1965-11-24 22:38 103 a-O ... SG 47 B = 10.97 0.20 B >17.51 0.10 2439093.47446 1965-11-28 23:16 103 a-O ... SG 55 B = 17.50 0.20 2439109.36052 1965-12-14 20:32 103 a-O ... SG 67 B = 11.05 0.10 B = 17.55 0.10 2439110.39106 1965-12-15 21:16 103 a-O ... SG 74 B = 11.01 0.10 B >17.51 0.10 ∗ 2439117.42840 1965-12-22 22:10 103 a-O ... SG 79 B = 11.10 0.10 B = 17.49 0.10 ∗ 2439121.42064 1965-12-26 21:59 103 a-O ... SG 87 B = 11.10 0.10 B = 17.49 0.10 2439128.47106 1966-01-02 23:12 IN Sen RG 5 SG 93 I = 9.74 0.10 I = 14.11 0.10 I = 14.79 0.10 2439141.30998 1966-01-15 19:21 IN Sen RG 5 SG 97 I = 9.74 0.10 I = 14.18 0.10 I = 14.79 0.10 2439141.35442 1966-01-15 20:25 IN Sen RG 5 SG 98 I = 9.56 0.10 I = 14.18 0.10 I = 14.79 0.10 2439141.49053 1966-01-15 23:41 103 a-O ... SG 104 B = 10.90 0.10 B >17.46 0.10 ∗ 2439144.47784 1966-01-18 23:23 103 a-O ... SG 110 B = 11.01 0.10 B >17.46 0.10 ∗ 2439146.33536 1966-01-20 19:58 103 a-O ... SG 126 B = 11.01 0.10 B = 17.51 0.10 2439149.33099 1966-01-23 19:52 103 a-O ... SG 138 B = 11.10 0.20 B = 17.57 0.20 ∗ 2439154.46258 1966-01-28 23:02 103 a-E RG 1 SG 168 R = 10.12 0.10 R = 15.51 0.10 R = 16.19 0.10 2439164.26807 1966-02-07 18:23 103 a-O RG 1 SG 175 R = 10.09 0.10 R >14.74 0.10 R >15.13 0.10 2439172.30976 1966-02-15 19:24 103 a-E RG 1 SG 187 R = 10.11 0.10 R = 15.51 0.10 R = 16.19 0.10 2439172.32226 1966-02-15 19:42 103 a-E RG 1 SG 188 R = 10.08 0.20 R >15.46 0.20 R = 15.77 0.20 2439172.33059 1966-02-15 19:54 103 a-E RG 1 SG 189 R = 10.06 0.10 R >14.74 0.10 R = 13.67 0.10 2439172.33754 1966-02-15 20:04 103 a-E RG 1 SG 190 R = 10.06 0.10 R >14.74 0.10 R = 13.67 0.10 2439199.29697 1966-03-14 19:09 IN Sen RG 5 SG 224 I = 9.56 0.10 I = 14.25 0.10 I = 14.79 0.10 2439205.32493 1966-03-20 19:50 103 a-E RG 1 SG 240 R = 10.08 0.10 R = 15.56 0.10 R = 16.19 0.10 2439206.29429 1966-03-21 19:06 IN Sen RG 5 SG 248 I = 9.56 0.10 I = 14.31 0.10 I = 14.79 0.10 2439206.32137 1966-03-21 19:45 103 a-E RG 1 SG 249 R = 10.08 0.20 2439206.63662 1966-03-22 03:19 103 a-E RG 1 SG 258 R = 10.09 0.20 2439412.61003 1966-10-14 02:34 IN Sen RG 5 SG 364 I = 9.56 0.10 I = 14.11 0.10 I = 14.51 0.10 2439437.51628 1966-11-08 00:17 103 a-O ... SG 384 B = 10.83 0.10 B = 17.31 0.10 ∗ 2439437.58087 1966-11-08 01:50 IN Sen RG 5 SG 386 I = 9.56 0.10 I = 14.28 0.10 I = 14.79 0.10 2439444.58806 1966-11-15 02:00 103 a-O ... SG 398 B = 10.83 0.10 B = 17.21 0.10 ∗ 2439473.39595 1966-12-13 21:23 103 a-O ... SG 459 B = 10.83 0.10 B = 17.48 0.10 ∗ 2439475.45426 1966-12-15 22:47 103 a-O ... SG 467 B = 10.97 0.10 B = 17.50 0.10 ∗ 2439476.38549 1966-12-16 21:08 103 a-O ... SG 477 B = 10.83 0.10 B >17.51 0.10 ∗ 2439502.40536 1967-01-11 21:38 IN Sen RG 5 SG 546 I = 9.74 0.10 I = 14.28 0.10 I = 14.33 0.10 2439502.43036 1967-01-11 22:14 103 a-O ... SG 547 B = 10.97 0.10 B >17.51 0.10 ∗ 2439530.40063 1967-02-08 21:34 103 a-O ... SG 577 B = 10.90 0.10 B >17.51 0.10 ∗ 2439531.36236 1967-02-09 20:39 IN Sen RG 5 SG 584 I = 9.56 0.10 I = 14.18 0.10 I = 14.45 0.10 2439553.30283 1967-03-03 19:16 103 a-O ... SG 608 B = 11.01 0.20 B >17.51 0.10 ∗ 2439553.34032 1967-03-03 20:10 IN Sen RG 5 SG 609 I = 9.74 0.10 I = 14.25 0.10 I = 14.45 0.10 2439823.52306 1967-11-29 00:26 IN Sen RG 5 SG 1083 I = 9.56 0.10 2439826.48003 1967-12-01 23:24 IN Sen RG 5 SG 1094 I = 9.74 0.10 I = 14.05 0.10 I = 14.51 0.10 2439826.54045 1967-12-02 00:51 103 a-O ... SG 1096 B = 10.97 0.10 B = 17.51 0.20 ∗ 2439829.50226 1967-12-04 23:56 103 a-O ... SG 1131 B = 10.76 0.10 B >17.51 0.10 ∗ 2439830.44740 1967-12-05 22:37 IN Sen RG 5 SG 1138 I = 9.74 0.10 I = 14.28 0.10 I = 14.51 0.10 2439832.44670 1967-12-07 22:36 IN Sen RG 5 SG 1185 R = 9.89 0.10 R = 14.62 0.10 R = 15.55 0.10 2439852.54840 1967-12-28 01:03 103 a-O ... SG 1226 B = 10.83 0.10 B = 17.55 0.10 ∗ 2439859.46687 1968-01-03 23:06 103 a-O ... SG 1262 B = 10.90 0.10 B = 17.50 0.10 ∗ 2439862.42924 1968-01-06 22:12 IN Sen RG 5 SG 1283 R = 9.89 0.10 R = 14.62 0.10 R = 15.98 0.10 2439877.36102 1968-01-21 20:35 IN Sen RG 5 SG 1323 R = 9.66 0.10 R = 14.62 0.10 R >16.19 0.10 2439881.35519 1968-01-25 20:27 IN Sen RG 5 SG 1351 R = 9.66 0.10 R = 14.85 0.10 R = 15.77 0.10 2439881.37255 1968-01-25 20:52 103 a-O ... SG 1352 B = 11.05 0.10 B >17.51 0.10 ∗ 2439886.31178 1968-01-30 19:25 IN Sen RG 5 SG 1374 R = 10.12 0.10 R = 14.85 0.10 R = 15.98 0.10 2439886.33261 1968-01-30 19:55 103 a-O ... SG 1375 B = 11.05 0.10 B = 17.51 0.10 ∗ 2439888.30469 1968-02-01 19:15 IN Sen RG 5 SG 1410 I = 9.56 0.10 I = 14.28 0.10 I = 14.45 0.10 2439888.32552 1968-02-01 19:45 103 a-O ... SG 1411 B = 10.90 0.10 B = 17.53 0.10 ∗ 2439905.28802 1968-02-18 18:53 103 a-O GG 13 SG 1432 B = 10.83 0.10 B = 17.64 0.10 ∗

Article number, page 7 of 13

A&A proofs: manuscript no. exor_plates_lang_2

Table 1. Continued.

NY Ori V1143 Ori V1118 Ori HJD date UT emulsion filter tel plate mag error mag error mag error 2439915.28576 1968-02-28 18:51 IN Sen RG 5 SG 1447 I = 9.56 0.10 I = 14.11 0.10 I = 14.51 0.10 2439915.30450 1968-02-28 19:18 103 a-O GG 13 SG 1448 B = 10.83 0.10 B = 17.66 0.10 ∗ 2440157.66927 1968-10-28 03:58 103 a-E RG 1 SG 1946 R = 10.12 0.10 R = 15.24 0.10 R = 16.19 0.10 2440185.61886 1968-11-25 02:44 103 a-O ... SG 1980 B = 10.90 0.10 B = 17.54 0.10 ∗ 2440203.46749 1968-12-12 23:06 103 a-O ... SG 2036 B = 10.83 0.10 B = 17.51 0.10 ∗ 2440208.57365 1968-12-17 25:39 103 a-O ... SG 2056 B = 10.83 0.10 B >17.46 0.10 ∗ 2440242.48394 1969-01-20 23:32 103 a-O ... SG 2146 B = 10.90 0.10 B = 17.51 0.10 ∗ 2440274.31616 1969-02-21 19:34 103 a-E RG645 SG 2238 R = 10.06 0.10 ∗ 2440274.39046 1969-02-21 21:21 103 a-D OG515 SG 2242 V = 10.38 0.10 V = 16.17 0.10 V >16.19 0.10 2440274.40227 1969-02-21 21:38 103 a-D OG515 SG 2243 V = 10.38 0.10 V >14.79 0.10 V >14.99 0.10 2440287.28099 1969-03-06 18:45 103 a-E RG645 SG 2254 R = 10.06 0.10 R >14.16 0.10 R >15.13 0.10 2440287.30321 1969-03-06 19:17 103 a-E RG645 SG 2255 R = 10.08 0.10 2440287.34418 1969-03-06 20:16 103 a-D OG515 SG 2258 V = 10.42 0.10 2440509.62817 1969-10-15 03:00 IN Sen RG 5 SG 2665 I = 9.56 0.10 I = 14.18 0.10 I >14.79 0.10 2440509.65804 1969-10-15 03:43 103 a-O GG 13 SG 2666 B = 10.83 0.10 B = 17.31 0.10 ∗ 2440511.62692 1969-10-17 02:58 IN Sen RG 5 SG 2687 I = 9.74 0.10 I = 14.18 0.10 I = 14.79 0.10 2440511.64706 1969-10-17 03:27 103 a-O ... SG 2688 B = 10.83 0.10 B = 17.34 0.10 ∗ 2440513.60274 1969-10-19 02:23 103 a-J OG515 SG 2702 V = 10.42 0.10 2440513.61316 1969-10-19 02:38 103 a-J OG515 SG 2703 V = 10.42 0.10 2440514.59447 1969-10-20 02:11 103 a-O ... SG 2709 B = 10.83 0.10 B >17.51 0.10 ∗ 2440514.62573 1969-10-20 02:56 103 a-D OG515 SG 2710 V = 10.38 0.10 V = 16.17 0.10 V >16.19 0.10 2440514.65628 1969-10-20 03:40 103 a-D OG515 SG 2711 V = 10.38 0.20 V = 16.48 0.20 V >16.19 0.20 2440514.66670 1969-10-20 03:55 103 a-D OG515 SG 2712 V = 10.38 0.10 V >14.79 0.10 2440514.67295 1969-10-20 04:04 103 a-D OG515 SG 2713 V = 10.38 0.20 2440515.62926 1969-10-21 03:01 103 a-O ... SG 2717 B = 10.90 0.10 B = 17.27 0.10 ∗ 2440515.64940 1969-10-21 03:30 IN Sen RG 5 SG 2718 I = 9.74 0.10 I = 14.18 0.10 I = 14.79 0.10 2440542.63813 1969-11-17 03:12 103 a-O ... SG 2798 B = 10.76 0.10 B = 17.51 0.10 ∗ 2440542.66174 1969-11-17 03:46 IN Sen RG 5 SG 2799 I = 9.56 0.10 I = 14.11 0.10 I >13.86 0.10 2440563.55642 1969-12-08 01:14 IN Sen RG 5 SG 2875 I = 9.74 0.10 I = 14.18 0.10 I = 14.56 0.10 2440563.58628 1969-12-08 01:57 103 a-O GG 13 SG 2876 B = 10.76 0.10 B >17.51 0.10 ∗ 2440572.57715 1969-12-17 01:44 103 a-O ... SG 2943 B = 10.76 0.10 B >17.15 0.10 ∗ 2440589.53078 1970-01-03 00:38 103 a-O ... SG 2987 B = 10.76 0.10 B = 17.51 0.10 ∗ 2440624.38480 1970-02-06 21:11 103 a-O ... SG 3088 B = 10.76 0.10 B = 17.51 0.10 ∗ 2440626.36937 1970-02-08 20:49 IN Sen RG 5 SG 3112 R = 9.89 0.10 R = 14.74 0.10 R = 15.87 0.10 2440629.43786 1970-02-11 22:28 IN Sen RG 5 SG 3122 R = 10.12 0.10 R = 14.74 0.10 R = 15.87 0.10 2440641.31184 1970-02-23 19:28 103 a-O ... SG 3132 B = 10.76 0.10 B >17.46 0.10 ∗ 2440645.31010 1970-02-27 19:26 103 a-O ... SG 3145 B = 10.76 0.10 B >17.46 0.10 ∗ 2440646.26071 1970-02-28 18:15 IN Sen RG 5 SG 3150 R = 9.66 0.10 R = 14.74 0.10 R = 15.45 0.10 2440870.63482 1970-10-11 03:10 103 a-O ... SG 3732 B = 10.83 0.10 B = 17.51 0.10 ∗ 2440870.65496 1970-10-11 03:39 IN Sen RG 5 SG 3733 R = 10.12 0.10 R = 14.80 0.10 R = 15.24 0.10 2440886.60043 1970-10-27 02:19 103 a-O ... SG 3801 B = 10.83 0.10 B >17.46 0.10 ∗ 2440888.65124 1970-10-29 03:32 IN Sen RG 5 SG 3833 R = 10.09 0.10 R = 14.68 0.10 R = 15.34 0.10 2440913.52506 1970-11-23 00:29 103 a-O ... SG 3883 B = 10.83 0.10 B >17.46 0.10 ∗ 2440915.60427 1970-11-25 02:23 103 a-O ... SG 3916 B = 10.83 0.10 B = 17.50 0.10 ∗ 2440917.65638 1970-11-27 03:38 103 a-O ... SG 3950 B = 10.76 0.10 B >17.51 0.10 ∗ 2440919.55779 1970-11-29 01:16 103 a-O ... SG 3975 B = 10.83 0.10 B = 17.51 0.10 ∗ 2440922.61962 1970-12-02 02:45 103 a-O ... SG 4002 B = 10.76 0.10 B = 17.50 0.10 ∗ 2440924.60573 1970-12-04 02:25 103 a-O ... SG 4031 B = 10.83 0.10 B = 17.51 0.10 ∗ 2440927.59809 1970-12-07 02:14 103 a-O ... SG 4048 B = 10.83 0.20 B >17.15 0.20 ∗ 2440941.49512 1970-12-20 23:46 103 a-O ... SG 4094 B = 10.76 0.10 B >17.51 0.10 ∗ 2440955.54603 1971-01-04 01:00 103 a-O ... SG 4143 B = 10.83 0.10 B >17.15 0.10 ∗ 2441249.62044 1971-10-25 02:48 IN Sen RG 5 SG 4854 I = 9.38 0.10 I = 14.18 0.10 I = 14.62 0.10 2441253.63039 1971-10-29 03:02 IN Sen RG 5 SG 4888 I = 9.74 0.10 I = 14.31 0.10 I = 14.62 0.10 2441271.63184 1971-11-16 03:03 IN Sen RG 5 SG 4924 I = 9.56 0.10 I = 14.31 0.10 I >13.86 0.10 2441271.65128 1971-11-16 03:31 103 a-O ... SG 4925 B = 10.83 0.10 B = 17.40 0.10 ∗ 2441281.61747 1971-11-26 02:42 103 a-O ... SG 4986 B = 10.76 0.10 B >17.51 0.10 ∗ 2441281.63553 1971-11-26 03:08 IN Sen RG 5 SG 4987 I = 9.56 0.10 I = 14.28 0.10 I >14.79 0.10 2441295.46961 1971-12-09 23:09 103 a-O ... SG 5034 B = 10.83 0.10 B = 17.40 0.10 ∗ 2441295.48836 1971-12-09 23:36 IN Sen RG 5 SG 5035 I = 9.74 0.20 I = 14.25 0.20 I >14.22 0.20 2441300.58552 1971-12-15 01:56 Ia-O ... SG 5094 B = 10.76 0.20 B = 17.31 0.20 ∗ 2441300.60497 1971-12-15 02:24 IN Sen RG 5 SG 5095 I = 9.74 0.10 I = 14.31 0.10 I = 14.79 0.10 2441331.44895 1972-01-14 22:41 103 a-O ... SG 5197 B = 10.83 0.10 B = 17.55 0.10 ∗ 2441331.46770 1972-01-14 23:08 IN Sen RG 5 SG 5198 I = 9.56 0.10 I = 14.31 0.10 I = 14.51 0.10 2441362.40154 1972-02-14 21:36 103 a-O ... SG 5219 B = 10.83 0.10 B >17.46 0.10 ∗ 2441362.42099 1972-02-14 22:04 IN Sen RG 5 SG 5220 I = 9.56 0.10 I = 14.31 0.10 I = 14.62 0.10 2441379.26743 1972-03-02 18:25 IN Sen RG 5 SG 5257 I = 9.56 0.10 I = 14.31 0.10 I = 14.62 0.10 2441379.28618 1972-03-02 18:52 103 a-O ... SG 5258 B = 10.76 0.10 B >16.24 0.10 ∗ 2441607.63458 1972-10-17 03:09 103 a-O ... SG 5699 B = 10.76 0.10 B = 17.37 0.10 ∗ 2441637.50616 1972-11-16 00:02 IN Sen RG 5 SG 5884 I = 9.38 0.10 I = 14.05 0.10 I = 14.68 0.10 2441637.52422 1972-11-16 00:28 103 a-O GG 13 SG 5885 B = 10.69 0.10 B = 17.37 0.10 ∗ 2441668.49103 1972-12-16 23:40 IN Sen RG 5 SG 5965 I = 9.38 0.10 I = 13.98 0.10 I = 14.51 0.10 2441688.37856 1973-01-05 20:59 103 a-D GG 14 SG 6053 V = 10.42 0.10 V = 16.25 0.10 V >16.19 0.10 2441689.37990 1973-01-06 21:01 IN Sen RG 5 SG 6073 I = 9.38 0.10 I = 13.98 0.10 I = 14.62 0.10

Article number, page 8 of 13

Jurdana-Šepić et al.: Past history of EXors

Table 1. Continued.

NY Ori V1143 Ori V1118 Ori HJD date UT emulsion filter tel plate mag error mag error mag error 2441713.38255 1973-01-30 21:07 103 a-O GG 13 SG 6185 B = 10.83 0.10 B >17.15 0.10 ∗ 2441713.39991 1973-01-30 21:32 IN Sen RG 5 SG 6186 I = 9.56 0.10 2441980.61214 1973-10-25 02:36 IN Sen RG 5 SG 6773 I = 9.38 0.10 I = 13.98 0.10 I = 14.73 0.10 2441984.47277 1973-10-28 23:15 103 a-E RG 1 SG 6817 R = 10.09 0.20 R = 15.51 0.20 R >15.13 0.20 2442015.58626 1973-11-29 01:57 103 a-D GG 14 SG 6887 V = 10.42 0.10 V >15.94 0.10 V >16.19 0.10 2442019.50851 1973-12-03 00:05 IN Sen RG 5 SG 6915 I = 9.74 0.10 I >13.57 0.10 I >14.22 0.10 2442030.32095 1973-12-13 19:35 103 a-O GG 13 SG 6929 B = 10.56 0.10 B >17.15 0.10 ∗ 2442030.34734 1973-12-13 20:13 IN Sen RG 5 SG 6930 I = 9.38 0.10 I = 13.91 0.10 I >14.22 0.10 2442360.53091 1974-11-09 00:38 IN Sen RG 66 SG 7576 I = 9.20 0.10 I = 14.05 0.10 I = 14.68 0.10 2442373.53616 1974-11-22 00:45 IN Sen RG 66 SG 7617 I = 9.38 0.10 I = 14.11 0.10 I = 14.56 0.10 2442396.52024 1974-12-15 00:22 IN Sen RG 66 SG 7687 I = 9.56 0.10 I = 14.11 0.10 I = 14.73 0.10 2442757.50432 1975-12-10 23:59 IN Sen RG 5 SG 8252 I = 9.38 0.10 I = 14.31 0.10 I = 14.79 0.10 2442781.40021 1976-01-03 21:30 IN Sen RG 5 SG 8269 I = 9.38 0.10 I = 14.18 0.10 I = 14.68 0.10 2442781.41896 1976-01-03 21:57 IN Sen RG 5 SG 8270 I = 9.56 0.10 I >13.57 0.10 I >14.22 0.10 2442787.40339 1976-01-09 21:35 IN Sen RG 5 SG 8302 I = 9.38 0.10 I = 14.28 0.10 I >14.22 0.10 2442835.30676 1976-02-26 19:21 IN Sen RG 5 SG 8409 I = 9.56 0.10 I = 14.28 0.10 I = 14.79 0.10 2443074.51134 1976-10-23 00:11 103 a-O GG 13 SG 8732 B = 10.76 0.10 B >17.46 0.10 B = 16.55 0.10 2443074.53148 1976-10-23 00:40 IN Sen RG 5 SG 8733 I = 9.38 0.10 I = 14.05 0.10 I = 14.18 0.10 2443128.50008 1976-12-15 23:53 103 a-O GG 13 SG 8812 B = 10.83 0.10 B >17.71 0.10 B = 16.55 0.10 2443128.51675 1976-12-16 00:17 IN Sen RG 5 SG 8813 I = 9.74 0.10 I = 14.05 0.10 I = 14.16 0.10 2443140.41504 1976-12-27 21:51 IN Sen RG 5 SG 8847 I = 9.56 0.10 I = 14.28 0.10 I >14.22 0.10 2443161.50774 1977-01-18 00:06 103 a-O GG 13 SG 8885 B = 10.83 0.10 B >17.46 0.10 B = 16.55 0.10 2443161.53066 1977-01-18 00:39 IN Sen RG 5 SG 8886 I = 9.56 0.10 I = 14.28 0.10 I = 14.21 0.10 2443483.45782 1977-12-05 22:52 IN Sen RG 5 SG 9367 I = 9.74 0.10 I = 14.11 0.10 I >14.22 0.10 2443483.47379 1977-12-05 23:15 103 a-O GG 13 SG 9368 B = 10.83 0.10 B = 17.46 0.10 B = 16.55 0.10 2443494.37298 1977-12-16 20:50 IN Sen RG 5 SG 9388 I = 9.56 0.10 I = 14.31 0.10 I = 14.16 0.10 2443494.46395 1977-12-16 23:01 103 a-O GG 13 SG 9391 B = 10.83 0.10 B = 17.43 0.10 B = 16.55 0.10 2443818.51481 1978-11-06 00:15 IN Sen RG 5 SG 9741 I = 9.74 0.10 I >13.20 0.10 2443818.54954 1978-11-06 01:05 103 a-D GG 14 SG 9742 V = 10.42 0.10 V = 15.82 0.10 V >14.99 0.10 2443837.42093 1978-11-24 21:59 103 a-O GG 13 SG 9798 B = 10.76 0.10 B = 17.55 0.10 B = 16.75 0.10 2443837.43760 1978-11-24 22:23 103 a-E RG 1 SG 9799 R = 9.89 0.10 R = 15.46 0.10 R = 15.87 0.10 2443837.45913 1978-11-24 22:54 IN Sen RG 5 SG 9800 I = 9.74 0.10 I = 14.19 0.10 2443842.52863 1978-11-30 00:34 103 a-E RG 1 SG 9811 R = 10.09 0.10 R = 15.40 0.10 R = 15.87 0.10 2443844.46614 1978-12-01 23:04 103 a-O GG 13 SG 9820 B = 10.83 0.10 B = 17.61 0.10 B = 16.65 0.10 2443844.52101 1978-12-02 00:23 103 a-E RG 1 SG 9822 R = 10.12 0.20 R = 15.56 0.20 R = 15.87 0.20 2443848.37865 1978-12-05 20:58 IN Sen RG 5 SG 9846 I = 9.74 0.10 I = 14.34 0.10 I >14.79 0.10 2443848.40573 1978-12-05 21:37 103 a-E RG 1 SG 9847 R = 10.08 0.20 R = 15.40 0.20 R = 16.19 0.20 2443848.42796 1978-12-05 22:09 103 a-D GG 14 SG 9848 V = 10.38 0.10 V = 16.25 0.10 V >16.19 0.10 2443848.44601 1978-12-05 22:35 103 a-O GG 13 SG 9849 B = 10.76 0.10 B = 17.37 0.10 ∗ 2443850.40851 1978-12-07 21:41 IN Sen RG 5 SG 9857 I = 9.38 0.10 I = 14.18 0.10 I = 14.79 0.10 2443876.44329 1979-01-02 22:32 103 a-O GG 13 SG 9873 B = 10.69 0.10 B >17.15 0.10 ∗ 2443876.46690 1979-01-02 23:06 103 a-E RG 1 SG 9874 R = 10.11 0.10 R = 15.40 0.10 R >15.13 0.10 2443893.37988 1979-01-19 21:02 103 a-O GG 13 SG 9892 B = 10.83 0.10 2443893.40140 1979-01-19 21:33 103 a-E RG 1 SG 9893 R = 10.09 0.10 2443903.41391 1979-01-29 21:52 103 a-O GG 13 SG 9897 B = 10.76 0.10 B = 17.40 0.10 ∗ 2443903.43543 1979-01-29 22:23 103 a-E RG 1 SG 9898 R = 10.09 0.10 R = 15.56 0.10 R = 16.19 0.10 2443926.31967 1979-02-21 19:39 103 a-O GG 13 SG 9913 B = 10.69 0.10 B >17.15 0.10 ∗ 2443926.33703 1979-02-21 20:04 103 a-E RG 1 SG 9914 R = 10.09 0.10 R = 15.72 0.10 R = 16.19 0.10 2444167.51951 1979-10-21 00:23 103 a-O GG 13 SG 10230 B = 10.76 0.10 B >17.46 0.10 ∗ 2444170.55997 1979-10-24 01:21 103 a-O GG 13 SG 10236 B = 10.83 0.10 B = 17.51 0.10 ∗ 2444190.45327 1979-11-12 22:46 103 a-O ... SG 10255 B = 10.83 0.10 B = 17.15 0.10 ∗ 2444195.42703 1979-11-17 22:08 103 a-O ... SG 10257 B = 10.76 0.10 B >17.15 0.10 ∗ 2444199.46671 1979-11-21 23:05 103 a-O GG 13 SG 10268 B = 10.76 0.10 B >17.15 0.10 ∗ 2444202.45704 1979-11-24 22:51 103 a-O GG 13 SG 10291 B = 10.76 0.10 B >17.15 0.10 ∗ 2444202.48343 1979-11-24 23:29 IN Sen RG 5 SG 10292 I = 9.56 0.10 I = 14.11 0.10 I = 14.18 0.10 2444203.41122 1979-11-25 21:45 IN Sen RG 5 SG 10296 I = 9.74 0.10 I = 14.28 0.10 I = 14.18 0.10 2444219.49667 1979-12-11 23:48 IN Sen RG 5 SG 10310 I = 9.74 0.10 I = 14.18 0.10 I = 14.51 0.10 2444220.41125 1979-12-12 21:45 103 a-O ... SG 10315 B = 10.83 0.10 B = 17.18 0.10 ∗ 2444224.41396 1979-12-16 21:49 103 a-O ... SG 10327 B = 10.83 0.10 B = 17.27 0.10 ∗ 2444224.43966 1979-12-16 22:26 IN Sen RG 5 SG 10328 I = 9.74 0.10 I = 14.28 0.10 I = 14.28 0.10 2444247.39372 1980-01-08 21:21 103 a-O GG 13 SG 10354 B = 10.69 0.10 B = 17.57 0.10 B = 16.75 0.10 2444247.41941 1980-01-08 21:58 IN Sen RG 5 SG 10355 I = 9.56 0.10 I = 14.28 0.10 I = 14.33 0.10 2444252.33026 1980-01-13 19:50 103 a-O ... SG 10371 B = 10.69 0.10 B = 17.61 0.10 ∗ 2444252.43789 1980-01-13 22:25 IN Sen RG 5 SG 10375 I = 9.75 0.10 I >12.93 0.10 2444257.37510 1980-01-18 20:55 103 a-O ... SG 10381 B = 10.76 0.10 B >17.46 0.10 B = 16.65 0.10 2444277.33337 1980-02-07 19:57 103 a-O ... SG 10397 B = 10.76 0.10 B = 17.57 0.10 B = 16.62 0.10 2444284.40084 1980-02-14 21:35 103 a-O ... SG 10414 B = 10.83 0.10 B >16.46 0.10 ∗ 2444587.53969 1980-12-14 00:50 103 a-E RG 1 SG 10728 R = 10.09 0.10 2444603.38649 1980-12-29 21:10 103 a-O ... SG 10738 B = 11.10 0.10 B = 17.54 0.10 B = 16.44 0.10 2444603.43024 1980-12-29 22:13 103 a-E RG 1 SG 10739 R = 10.12 0.10 R = 15.35 0.10 R = 15.13 0.20 2444603.45385 1980-12-29 22:47 IN Sen RG 5 SG 10740 I = 9.38 0.10 I = 14.18 0.10 I = 14.16 0.10 2444607.43216 1981-01-02 22:16 IN Sen RG 5 SG 10756 I = 9.74 0.10 I = 14.25 0.10 I = 14.45 0.10 2444607.45716 1981-01-02 22:52 103 a-O GG 13 SG 10757 B = 10.83 0.10 B >17.15 0.10 ∗

Article number, page 9 of 13

A&A proofs: manuscript no. exor_plates_lang_2

Table 1. Continued.

NY Ori V1143 Ori V1118 Ori HJD date UT emulsion filter tel plate mag error mag error mag error 2444607.48216 1981-01-02 23:28 103 a-E RG 1 SG 10758 R = 9.89 0.10 R = 15.66 0.10 R = 15.34 0.10 2444609.39457 1981-01-04 21:22 103 a-O GG 13 SG 10770 B = 10.83 0.10 B >17.15 0.10 ∗ 2444630.40444 1981-01-25 21:38 103 a-O GG 13 SG 10818 B = 10.83 0.10 B >17.15 0.10 ∗ 2444630.42180 1981-01-25 22:03 103 a-D GG 14 SG 10819 V = 10.38 0.10 V = 16.02 0.10 V >16.19 0.10 2444630.44263 1981-01-25 22:33 103 a-E RG 1 SG 10820 R = 9.89 0.10 R = 15.66 0.10 R >15.13 0.10 2444630.46832 1981-01-25 23:10 IN Sen RG 5 SG 10821 I = 9.56 0.10 I = 14.34 0.10 I = 14.79 0.10 2444633.32784 1981-01-28 19:48 103 a-O GG 13 SG 10837 B = 10.76 0.10 B >17.15 0.10 ∗ 2444633.35353 1981-01-28 20:25 103 a-D GG 14 SG 10838 V = 10.38 0.10 V = 16.17 0.10 V = 16.08 0.10 2444633.37575 1981-01-28 20:57 103 a-E RG 1 SG 10839 R = 10.09 0.10 R = 15.02 0.10 R = 15.13 0.20 2444633.40214 1981-01-28 21:35 IN Sen RG 5 SG 10840 I = 9.38 0.10 I = 14.05 0.10 I = 14.51 0.10 2444638.37259 1981-02-02 20:53 103 a-D GG 14 SG 10878 V = 10.38 0.10 V = 16.17 0.10 V = 16.08 0.10 2444638.39343 1981-02-02 21:23 IN Sen RG 5 SG 10879 I = 9.38 0.10 I = 14.05 0.10 I = 14.09 0.10 2444638.41703 1981-02-02 21:57 103 a-E RG 1 SG 10880 R = 10.09 0.10 R = 14.85 0.10 R = 14.54 0.10 2444642.41533 1981-02-06 21:55 103 a-O GG 13 SG 10902 B = 10.83 0.10 B >17.15 0.10 ∗ 2444642.44102 1981-02-06 22:32 103 a-E RG 1 SG 10903 R = 10.09 0.10 R >15.46 0.10 R >15.13 0.10 2444934.55429 1981-11-26 01:11 103 a-E RG 1 SG 11248 R = 10.14 0.20 R = 15.46 0.20 2444934.57929 1981-11-26 01:47 103 a-O GG 13 SG 11249 B = 10.83 0.10 B >17.51 0.10 2444940.52517 1981-12-02 00:29 IN Sen RG 5 SG 11271 I = 9.38 0.10 I = 14.18 0.10 I = 14.51 0.10 2444944.44879 1981-12-05 22:39 IN Sen RG 5 SG 11276 I = 9.74 0.10 I = 14.11 0.10 I = 14.79 0.10 2444973.51476 1982-01-04 00:15 103 a-E RG 1 SG 11310 R = 10.09 0.20 2444986.38560 1982-01-16 21:10 103 a-O GG 13 SG 11313 B = 10.83 0.20 B = 17.06 0.20 2444988.42367 1982-01-18 22:05 103 a-O ... SG 11327 B = 17.31 0.20 2444990.42146 1982-01-20 22:02 103 a-E RG 1 SG 11342 R = 14.85 0.10 2444990.44715 1982-01-20 22:39 103 a-O ... SG 11343 B >17.15 0.20 2445001.44845 1982-01-31 22:42 103 a-E RG 1 SG 11379 R = 14.85 0.10 2445340.38622 1983-01-05 21:10 103 a-O ... SG 11834 B = 10.97 0.10 B = 14.25 0.10 B >17.29 0.10 2445340.42371 1983-01-05 22:04 103 a-E RG 1 SG 11835 R = 10.09 0.10 R = 13.10 0.10 R >15.13 0.10 2445341.42436 1983-01-06 22:05 IN Sen RG 5 SG 11840 I = 9.38 0.20 I >12.84 0.20 2445351.35437 1983-01-16 20:25 103 a-E RG 1 SG 11889 R = 10.09 0.10 2445352.41264 1983-01-17 21:49 103 a-O ... SG 11892 B = 10.83 0.10 B = 14.86 0.10 ∗ 2445352.44180 1983-01-17 22:31 IN Sen RG 5 SG 11893 I = 9.38 0.10 I >12.84 0.20 I >14.79 0.10 2445368.30319 1983-02-02 19:13 103 a-O GG 13 SG 11916 B = 10.83 0.10 B = 15.00 0.10 ∗ 2445368.32888 1983-02- 2 19:50 103 a-E RG 1 SG 11917 R = 13.86 0.10 2445369.28853 1983-02-03 18:52 103 a-O GG 13 SG 11923 B = 10.83 0.10 B = 14.86 0.10 ∗ 2445369.31700 1983-02-03 19:33 IN Sen RG 5 SG 11924 I = 9.38 0.10 I >12.84 0.10 I >14.79 0.10 2445370.35581 1983-02-04 20:29 IN Sen RG 5 SG 11978 I = 9.74 0.10 I = 13.31 0.10 I >14.22 0.10 2445370.36345 1983-02-04 20:40 103 a-O GG 13 SG 11931 B = 10.83 0.10 B = 14.86 0.10 ∗ 2445370.38914 1983-02-04 21:17 103 a-D GG 14 SG 11932 V = 10.38 0.10 V = 14.78 0.10 V >16.19 0.10 2445378.40099 1983-02-12 21:35 103 a-O GG 13 SG 11940 B = 10.83 0.10 B = 14.86 0.10 ∗ 2445378.44612 1983-02-12 22:40 103 a-D GG 14 SG 11941 V = 10.38 0.10 V = 13.76 0.10 V >16.19 0.10 2445382.41107 1983-02-16 21:50 103 a-O GG 13 SG 11946 B = 10.83 0.10 B = 15.00 0.10 ∗ 2445382.43884 1983-02-16 22:30 103 a-D GG 14 SG 11947 V = 10.42 0.10 V = 14.77 0.10 V >16.19 0.10 2445383.44570 1983-02-17 22:40 103 a-O ... SG 11953 B = 10.83 0.20 B >16.24 0.20 ∗ 2445404.33206 1983-03-10 19:59 103 a-O ... SG 12017 B = 10.83 0.10 B = 15.15 0.10 ∗ 2445430.30976 1983-04-05 19:30 103 a-O GG 13 SG 12041 B = 10.83 0.10 B = 15.00 0.10 ∗ 2445649.49625 1983-11-10 23:48 IN Sen RG 5 SG 12317 I = 9.74 0.10 I = 13.31 0.10 I = 11.63 0.10 2445649.52889 1983-11-11 00:35 103 a-E RG 1 SG 12318 R = 10.11 0.10 R = 13.76 0.10 R = 13.22 0.10 2445705.41470 1984-01-05 21:51 IN Sen RG 5 SG 12398 I = 9.74 0.10 I = 13.77 0.10 I = 11.63 0.10 2445724.41983 1984-01-24 22:00 IN Sen RG 5 SG 12421 I = 9.38 0.10 I = 13.42 0.10 I = 12.31 0.10 2446029.48414 1984-11-24 23:30 103 a-E RG 1 SG 12676 R = 10.09 0.10 R = 13.76 0.10 R >15.13 0.10 2446117.36207 1985-02-20 20:40 IN Sen RG 5 SG 12785 I = 9.74 0.10 I = 13.35 0.10 I = 14.22 0.10 2446117.40373 1985-02-20 21:40 103 a-O GG 13 SG 12786 B = 10.83 0.10 B = 15.76 0.10 ∗ 2446402.45504 1985-12-02 22:48 IN Sen RG 5 SG 13150 I = 9.38 0.10 I = 14.31 0.10 I >14.79 0.10 2446403.42379 1985-12-03 22:03 103 a-E RG 1 SG 13156 R = 10.09 0.10 R = 15.46 0.10 R >15.13 0.10 2446411.48417 1985-12-11 23:30 103 a-O GG 13 SG 13164 B = 10.83 0.10 B = 17.27 0.10 2446418.46114 1985-12-18 22:57 IN Sen RG 5 SG 13201 I = 9.74 0.10 I = 13.71 0.10 I = 14.68 0.10 2446418.49100 1985-12-18 23:40 103 a-O GG 13 SG 13202 B = 10.83 0.10 B = 17.27 0.10 ∗ 2446446.41552 1986-01-15 21:53 IN Sen RG 5 SG 13258 I = 9.56 0.10 I = 14.41 0.10 I >14.79 0.10 2446803.43473 1987-01-07 22:20 IN Sen RG 5 SG 13669 I = 9.38 0.10 I = 14.11 0.10 I = 14.79 0.10 2446819.35808 1987-01-23 20:31 103 a-E RG 1 SG 13679 R = 10.09 0.10 R = 15.19 0.10 R = 15.77 0.10 2446828.35187 1987-02-01 20:23 103 a-D GG 14 SG 13705 V = 10.42 0.10 V = 16.02 0.10 V >16.19 0.10 2446829.41568 1987-02-02 21:55 IN Sen RG 5 SG 13711 I = 9.56 0.10 I = 14.11 0.10 I >14.22 0.10 2446849.35430 1987-02-22 20:29 IN Sen RG 5 SG 13725 I = 9.56 0.10 I = 13.77 0.10 I = 14.79 0.10 2447178.47168 1988-01-17 23:14 103 a-E RG 1 SG 13992 R = 10.11 0.10 R = 15.40 0.10 R = 15.24 0.10 2447184.28588 1988-01-23 18:47 IN Sen RG 5 SG 13995 I = 9.38 0.10 I = 14.11 0.10 I = 14.28 0.10 2447205.32385 1988-02-13 19:44 103 a-E RG 1 SG 14003 R = 10.11 0.10 R = 15.40 0.10 R = 15.24 0.10 2447206.33140 1988-02-14 19:55 IN Sen RG 5 SG 14009 I = 9.56 0.10 I = 14.28 0.10 I = 14.16 0.10 2447537.38593 1989-01-10 21:10 Tri-X ... SP 17844 V = 10.49 0.10 V >15.32 0.10 V >13.22 0.10 2447537.39635 1989-01-10 21:25 103 a-O ... SP 17845 B = 11.01 0.10 B >17.15 0.10 B = 14.71 0.10 2447569.40380 1989-02-11 21:39 IN Sen RG 5 SG 14473 I = 9.38 0.10 I = 14.25 0.10 I = 12.02 0.10 2447863.49393 1989-12-02 23:44 103 a-O GG 13 SG 14747 B = 10.76 0.10 B = 16.88 0.10 B = 14.16 0.10 2448299.36843 1991-02-11 20:48 103 a-O GG 13 SG 14998 B = 10.76 0.10 B >17.15 0.10 ∗ 2448299.40037 1991-02-11 21:34 IN Sen RG 5 SG 14999 I = 9.56 0.10 I >14.25 0.10 I >14.79 0.10

Article number, page 10 of 13

Jurdana-Šepić et al.: Past history of EXors

Fig. 3. BVRI light curves of NY Ori.

Table 1. Continued.

NY Ori V1143 Ori V1118 Ori HJD date UT emulsion filter tel plate mag error mag error mag error 2448595.53490 1991-12-05 00:43 103 a-O GG 13 SG 15099 B = 10.83 0.10 B = 17.18 0.10 ∗ 2448651.43058 1992-01-29 22:16 103 a-O GG 13 SG 15153 B = 10.83 0.10 B = 17.46 0.10 B = 17.16 0.10 2448651.45489 1992-01-29 22:51 IN Sen RG 5 SG 15154 I = 9.56 0.10 I = 14.18 0.10 I = 14.18 0.10 2448682.35092 1992-02-29 20:25 IN Sen RG 5 SG 15218 I = 9.56 0.10 I = 13.71 0.10 I = 14.22 0.10 2448686.32349 1992-03-04 19:46 IN Sen RG 5 SG 15236 I = 9.38 0.10 2448974.47643 1992-12-17 23:19 103 a-O GG 13 SG 15339 B = 10.76 0.10 B = 16.97 0.10 ∗ 2448974.51045 1992-12-18 00:08 IN Sen RG 5 SG 15340 I = 9.56 0.10 I = 13.98 0.10 I = 14.16 0.10 2449004.42100 1993-01-16 22:01 103 a-O GG 13 SG 15380 B = 10.97 0.10 B = 15.09 0.10 ∗ 2449004.44877 1993-01-16 22:41 IN Sen RG 5 SG 15381 I = 9.38 0.10 I = 13.42 0.10 I = 14.15 0.10 2449036.38524 1993-02-17 21:13 IN Sen RG 5 SG 15455 I = 9.74 0.10 I = 13.35 0.10 I = 14.15 0.10 2449036.41301 1993-02-17 21:53 103 a-O GG 13 SG 15456 B = 10.90 0.10 B = 15.07 0.10 ∗ 2449328.42656 1993-12-06 22:07 IN Sen RG 5 SG 15677 I = 9.56 0.10 2449334.43763 1993-12-12 22:23 IN Sen RG 5 SG 15699 I = 9.56 0.20 I = 13.98 0.20 I >14.22 0.20

event, by considering only the simultaneous plates (i.e. taken at a maximum temporal distance of one day), we are able to build a colour-magnitude plot B vs.[B−I] practically unaffected by short time fluctuations and shown in the left panel of Figure 4. Still unpublished data (Giannini et al. in preparation), that we collected during the very recent 2015-2016 outburst (Giannini et al. 2016) are shown on the figure, as are data from the current plate study. In both cases, the source presents the very common behaviour to become bluer when brightening, but definitely not following the extinction law (depicted by the arrow). These colours provide a further confirmation that the increase of brightness of V1118 Ori is accretion- more than extinction-driven (Lorenzetti et al. 2015). Moreover, by considering the two distributions of open and solid data points, one could suspect that the different origin of the two data set (CCD and plates) has a role in determining the colour segregation, but this is not true as confirmed by the green data points relative to the 2005 outburst (Audard et al. 2005). The 2005 data perfectly overlap the plate photometry presented

Article number, page 11 of 13

A&A proofs: manuscript no. exor_plates_lang_2

Fig. 4. B vs [B − I] colour-magnitude plot of V1118 (left) and V1143 Ori (right). In the left panel open circles (in blue) refer to our data still unpublished (Giannini et al. in preparation). Solid circles (black and red) refer to the present data. Green circles are given for comparison purposes and refer to a recent outburst of V1118 monitored by Audard et al. (2005). In the lower-left corner the arrow indicates an extinction of A_V = 1 mag, according to the law by Rieke & Lebofsky (1985).

here, thus testifying on the one hand the reliability of the Asiago plates, on the second hand the fact that different bursts may have different colours and intensities.

4.2. V1143 Ori

Two bursts are recognizable in our light curves (see Figure 2 and also Table 1): the first appears as a steep rise up to a maximum in January 1983, followed by a slower declining; the second occurred in January 1993 and presents the same rapid increase (less than one month). Mention of both events was already given by Parsamian & Gasparian (1987) and Mampaso & Parsamian (1995), respectively, but quiescence data in the same bands are not provided, so preventing any comparative colour analysis. Our plate data, instead, allow this comparison, given in the right panel of Figure 4. This latter indicates the two bursts were practically identical in both B amplitude and [B − I] colour, and, more importantly, that this two bursts follow exactly the extinction curve with a variation corresponding to ΔA_V = 2 mag. This result, if confirmed by future observations, could indicate V1143 Ori is not a genuine EXor, since both its historical outbursts are severely contaminated by extinction effects. As for V1118, our data provide a good overall sampling of the quiescent phase, in fact the I-band photometry fills the temporal gap 1972- 1977 uncovered in the BVR bands. Our quiescence photometry agrees with the sparse values listed so far in the literature (Herbig, 2008 and references therein).

4.3. NY Ori

As previously mentioned, the measurements of NY Ori (Table 1) actually refer to the combination of the EXor source and the close star V566 Ori. Optical light curves (Figure 3) seem dominated by the brighter V566 Ori in the bands BVR, while in the I band the EXor becomes to prevail. The shortest wavelength colours are compatible with an early type star (SpT A-

F), whereas at longer wavelength colours become redder and are those typical of a late type source. A confirmation of that stems from the JHK near-infrared photometry carried out at our telescope at Campo Imperatore (D’Alessio et al. 2000). For V566 Ori, we obtained J = 9.73, H = 9.70, and K = 9.70, in agreement with 2MASS results (J = 9.75, H = 9.74, and K = 9.73); while our IR monitoring of the EXor NY Ori provided evidence of both redder colours and some variability: J (9.8 - 10.6), H (8.9 - 9.4), and K (8.1 - 8.5). At the same telescope, we obtained low-resolution (R ∼ 200) near-IR spectra (1-2.5 μm) of both sources. V566 Ori is characterised by strong HI absorption lines (Paschen and Brakett series), while the EXor appears as a typical emission-line object (Lorenzetti et al. 2009). Finally, we note in Figure 3 how the temporal coverage in V band fills the gap of I band observations in the period 1961-1967, so we can conclude that during our 40 yrs monitoring no major outburst occurred with a duration longer than six months. Such a conclusion is based on the analysis of the I ligthcurve, namely that in which both stars have a comparable brightness.

5. Concluding remarks

Archival plate analysis is a powerful tool to investigate the historical behaviour of EXor stars, and to infer on their nature.

We investigated the Asiago Schmidt plate collection for observations of the Orion Nebula Cluster where the three EXors sources V1118 Ori, V1143 Ori, and NY Ori are located. Observations of this region were repeatedly carried out at Asiago over a timespan of about 40 years since 1958 and the three sources were acquired on the same plates.

We provide one of the best-sampled photometric dataset ever obtained of the quiescent phase of the three targets. V1118 and V1143 present, in quiescence, a level of modest variability (0.2- 0.4 mag) that is comparable with that of classical T Tauri stars.

For V1118 Ori, two already known outbursts are detected together with a newly discovered flare-up of 2.5 mag (R band),

Article number, page 12 of 13

Jurdana-Šepić et al.: Past history of EXors

Table 2. Ranges of photometric variability. For each source and each band, we list the number of observations (col.3), the median, which basically indicates the magnitude in quiescence (col.4), the standard deviation data point distribution (col.5), and the magnitude corresponding to the peak brightness (col.6).

Source Band N_{obs} Median σ Peak (mag) V1118 Ori B 13 16.62 0.25 14.16 V 2 16.02 ... ... R 33 15.51 0.64 13.33 I 69 14.56 0.24 11.63 V1143 Ori B 67 17.49 0.25 14.35 V 52 16.71 0.44 13.76 R 47 15.40 0.41 13.10 I 81 14.18 0.15 13.31 NY Ori B 180 10.83 0.10 10.56 V 93 10.45 0.04 10.35 R 65 10.09 0.11 9.66 I 102 9.56 0.14 9.20

which brightened up in only 40 min and lasted less than one month. Our data most likely ascertain the longest quiescence period known so far (about 15 yrs): this result on the one hand does not support the existence of a recurrent period between the outbursts, on the other hand allows us to define a reliable value of the quiescence brightness. The colour analysis confirms the robustness of the plate photometry and rules out the extinction as the main origin of the brightness variations.

For V1143 Ori, two outbursts already mentioned in the past literature are found, but the complete set of colours are given here for the first time. This is relevant, since the colour analysis demonstrates as both outbursts, at variance with those of V1118, can be accounted for with pure extinction variations, putting some doubts on the EXor nature of V1143.

As for NY Ori, this target and the close source V566 Ori cannot be resolved in our plates, so that the given photometry refers to the combined pair. Nevertheless, as the two objects have a similar brightness in the I band, we can conclude that the EXor source did not undergo any major outburst (> 2 mag) during the 40 yr monitoring.

Acknowledgements. R.J.S. thanks the INAF Astronomical Observatory of Padova for the hospitality during the stay in Asiago and for permission to use the historical plate archive of the Asiago Observatory. This work was supported in part by the Croatian Science Foundation under the project 6212 Solar and Stellar Variability and by the University of Rijeka under the project number 13.12.1.3.03.

References

Adams, F. C., & Lin, D. N. C. 1993, Protostars and Planets III, 721 Antoniucci, S., Arkharov, A. A., Di Paola, A., et al. 2013, Protostars and Planets VI Posters, 2 Antoniucci, S., Arkharov, A. A., Di Paola, A., et al. 2014, A&A, 565, L7 Audard, M., Güdel, M., Skinner, S. L., et al. 2005, ApJ, 635, L81 Audard, M., Stringfellow, G. S., Güdel, M., et al. 2010, A&A, 511, A63 Audard, M., Ábrahám, P., Dunham, M. M., et al. 2014, Protostars and Planets VI, 387 Bell, K.R., & Lin, D.N.C 1994, ApJ, 427, 987 Bonnell, L. & Bastien, P. 1992, ApJ 401, L31 D’Alessio, F., Di Cianno, A., Di Paola, A., et al. 2000, Proc. SPIE, 4008, 748 D’Angelo, C.R., & Spruit, H.C. 2010, MNRAS, 406, 1208 García García, J. & Parsamian, E.S. 2000 Information Bulletin of Variable Stars n.4925

Giannini, T., Lorenzetti, D., Antoniucci, S., et al. 2016, ApJ, 819, L5 Hartmann, L., & Kenyon, S. 1985, ApJ, 299, 462 Jurdana-Šepić, R., & Munari, U. 2016, New A., 43, 87 Kóspál, Á., Ábrahám, P., Acosta-Pulido, J. A., et al. 2011, A&A, 527, A133 Henden, A. A., Levine, S. E., Terrell, D., Smith, T. C., & Welch, D. 2012, Journal of the American Association of Variable Star Observers (JAAVSO), 40, 430 Henden, A., & Munari, U. 2014, Contributions of the Astronomical Observatory Skalnate Pleso, 43, 518 Herbig, G.H. 1989, Proc. of the ESO Workshop on Low Mass Star Formation and Pre-Main Sequence Objects, ed. B. Reipurth, p.233 Herbig, G.H. 2008, AJ, 135, 637 Lodato, G., & Clarke, C.J. 2004, MNRAS, 353, 841 Lorenzetti, D., Giannini, T., Calzoletti, L., et al. 2006, A&A, 453, 579 Lorenzetti, D., Giannini, T., Larionov, V. M., et al. 2007, ApJ, 665, 1182 Lorenzetti, D., Larionov, V. M., Giannini, T., et al. 2009, ApJ, 693, 1056 Lorenzetti, D., Antoniucci, S., Giannini, T., et al. 2012, ApJ, 749, 188 Lorenzetti, D., Antoniucci, S., Giannini, T., et al. 2015, ApJ, 802, 24 Mampaso, A., & Parsamian, E.S. 1995, Inf. Bull. Variable Stars, 4269 Moro, D., & Munari, U. 2000, A&AS, 147, 361 Munari U., 2012, JAVSO, 40, 582 Munari, U. 2014, in Astroplate 2014, L. Misková and S. Vítek eds., published by the Institute of Chemical Technology, Prague, 2014 Munari, U., Henden, A., Frigo, A., et al. 2014, AJ, 148, 81 Munari, U., & Dallaporta, S. 2014, New A, 27, 25 Parsamian, E.S., Ibragimov, M.A., Oganian, G.B. & Gasparian, K.G. 1993 Astrophysics 36, 23 Paul, C., Kroll, P., & Lehmann, T. 1995, Proc. IAU Colloquium No. 151;

Sonneberg; 5-9 Dec. 1994. Lecture Notes in Physics; vol. 454 p.229. Eds J.Greiner, W.Hilmar. Duerbeck, and E.Roald E. Gershberg.

Parsamian, E.S., & Gasparian, K.G.1987 Astrophysics, 27, 598 Rieke, G.H., & Lebofsky, M.J. 1985, ApJ, 288, 618 Shu, F., Najita, J., Ostriker, E., et al. 1994, ApJ, 429, 781 Sicilia-Aguilar, A., Kóspál, Á., Setiawan, J., et al. 2012, A&A, 544, A93 Xiao, L., Kroll, P., & Henden, A.A. 2010, AJ, 139, 1527

Article number, page 13 of 13