arXiv:1704.06443v1 [astro-ph.IM] 21 Apr 2017

Astronomy & Astrophysics manuscript no. article_lune_v2 © ESO 2019 June 26, 2019

Lunar laser ranging in infrared at the Grasse laser station

C. Courde^1, J.M. Torre^1, E. Samain^1, G. Martinot-Lagarde^1 , M. Aimar^1, D. Albanese^1, P. Exertier^1, A. Fienga^1, H. Mariey^1, G. Metris^1, H. Viot^1, and V. Viswanathan^1

Université Côte d’Azur, CNRS, Observatoire de la Côte d’Azur, IRD, Géoazur UMR 7329, 2130 route de l’Observatoire, 06460 Caussols, France e-mail: clement.courde@geoazur.unice.fr

Received March 24, 2016; accepted

ABSTRACT

For many years, lunar laser ranging (LLR) observations using a green wavelength have suffered an inhomogeneity problem both temporally and spatially. This paper reports on the implementation of a new infrared detection at the Grasse LLR station and describes how infrared telemetry improves this situation. Our first results show that infrared detection permits us to densify the observations and allows measurements during the new and the full Moon periods. The link budget improvement leads to homogeneous telemetric measurements on each lunar retro-reflector. Finally, a surprising result is obtained on the Lunokhod 2 array which attains the same efficiency as Lunokhod 1 with an infrared laser link, although those two targets exhibit a differential efficiency of six with a green laser link.

Key words. detectors – Moon

1. Introduction

The Lunar laser ranging (LLR) technique has existed since the beginning of the Moon conquest in 1969. Thanks to the installation of retro-reflectors on the Moon surface, it was then possible to measure the Earth-Moon distance. LLR exploits two kinds of retro-reflector arrays: three American arrays (A11, A14 & A15) placed during the Apollo missions 11, 14 & 15 ; and two French arrays (L1 & L2) loaded on Soviet rovers Lunokhod 1 & 2.

Long-term observations of Earth-Moon distances, associated with a continuous improvement of the metrological performances, contributed significantly to the understanding of the Moon internal structure, its dynamics, and its interactions with the Earth. The Earth-Moon system is an essential laboratory for the study of the solar system and in particular its formation mechanisms. Despite the analysis of data collected by the Apollo missions, space missions in orbit (i.e. the GRAIL mission) and 45 years of LLR data, many questions remain, including on the internal physics of the Moon. Although the Moon formation scenario seems almost established, the presence of a fluid without a solid core could jeopardise the mechanisms of differentiation used until now in scenarios of formation and evolution of the solar system (Williams et al. 2012). Moreover, LLR data are essential to fundamental physics tests (Williams et al. 2012; Fienga et al. 2014b) that require regular data sampling spread out over several dozens of years. Lunar laser ranging data are currently providing on-ground tests of the equivalence principle (EP) that are as accurate as those provided by torsion balances (Williams et al. 2012). Because the Earth and Moon are large bodies, LLR measurements also have the advantage of allowing us to test the contribution of the internal energy to the EP. The equivalence principle is at the heart of general relativity and many alternative theories of gravity predict its violation. A complete review of research undertaken using LLR data can be found in (Murphy 2013; Merkowitz 2010; Müller et al. 2012).

Since its beginning, the LLR technique has been based on the time-of-flight measurement of an optical pulse during its round-trip between the Earth and the Moon. The LLR technique is similar to satellite laser ranging (SLR). However, due to the large distance between the Earth and the Moon, the performance of the sub-systems are quite different. The round trip loss, which is the ratio of photon numbers received and sent, is around 1:10^{18}, meaning that large and costly SLR facilities are required to compensate for this. Among the 40 SLR stations of the International Laser Ranging Service (ILRS) network, only a few stations are able to detect echoes on the Moon. Consequently, only four stations supply Earth-Moon range observations to the ILRS database: APOLLO (New Mexico, USA), McDonald (Texas, USA), Matera (Italy) and Grasse (France). Apart from APOLLO, the other LLR stations suffer from a low detection rate, for example, the photon flux at Grasse on A15 is roughly 0.1 photon.s^{−1} compared to the 63 photons.s^{−1} at APOLLO (Murphy 2013). The quality of LLR data is quite different between stations and only APOLLO, thanks to its greater detection rate, has measurements limited by the orientation of the reflector array and the associated spread of pulse return times. The single-photon events dated by LLR stations over observations of ten minutes are combined to generate “normal points” (NPs). These condensed range observations and the different conditions and corrections associated with them are formated in “consolidated range data” (CRD) files, that are then delivered to, and made available to the scientific community, by the ILRS. These NPs are then compared to theories based on models of the solar system that include prescriptions of all the physical effects that have an impact on the measurement. Several LLR models are under development around the world, at the following locations: the Jet Propulsion Laboratory (JPL), USA; the Harvard-Smithsonian Center for Astrophysics (CfA), USA; the Leibniz University in Hanover, Germany; the Paris Observatory, France; the Institute of Applied Astronomy of the Russian

Article number, page 1 of 13

A&A proofs: manuscript no. article_lune_v2

Fig. 1. Number of NPs in 2014, from Grasse only, versus the lunar phase. All the observations were with the green wavelength. New Moon is depicted by a dark disk and matches lunar phase 0.0. Full Moon is depicted by a bright disk and matches lunar phase 0.5.

Academy of Sciences, Russia. In our laboratory, a team works on LLR reduction models using the GINS software (Geodesy by Simultaneous Digital Integration developed by the Centre National d’Etudes Spatiales (CNES)) (Marty et al. 2011), as part of the LLR stepwise comparison study mentioned in (Murphy 2013). The JPL model currently demonstrates the best performance because weighted root-mean-square (RMS) residuals around 18 mm are obtained from the comparison with LLR NPs produced at Grasse (Viswanathan et al. 2015) and at APOLLO (Murphy 2013). However, APOLLO’s millimetric level performance (Battat et al. 2009; Murphy et al. 2012) is ten times better than this difference, suggesting that the models need major improvements. In parallel with model improvements, investigations have to be undertaken into LLR data production.

Despite around 40 years of continuous developments, acquisition of LLR data remains complicated. The distribution of LLR observations is not temporally and spatially homogenous. On the Earth, active LLR stations are only present in the northern hemisphere. This results in a non-complete coverage of the whole lunar orbit. It has also been demonstrated that an improvement of the temporal distribution could drive an improvement of the EP test, thanks to the solving of an asymmetry problem of the post-fit signal resulting from a cos D nodal signal in the residuals (Nordtvedt 1998; Müller & Nordtvedt 1998).

In Fig. 1, we show the NPs production of the Grasse station during the year 2014 versus the lunar phases. During two particular phases, we see a lack of data. The first point is at the new Moon period, during which the Moon is not lit by the sun. Two difficulties must be overcome in this configuration. Firstly, we can no longer accurately correct the pointing by using our knowledge of the Moon topography near the target despite a good pointing model of the telescope. Secondly, we have to observe near the Sun, often at an angle less than 10^∘ to it (the sun avoidance angle at Grasse is 6^∘). This yields a high level of noise hiding many laser echoes. The presence of the Sun close to the Moon also makes it difficult to observe reference stars that are very useful to improve the pointing model of the telescope. The second point is at the full Moon, the period during which the Moon is totally lit by the Sun, this light strongly reduces the signal to noise ratio. The number of targets is also restricted to the only reflectors not distorted too much by solar heating, namely A11, A14 & A15.

Fig. 2. Distribution of the NP on the different lunar retro-reflectors during the year 2014 with green beam at the Grasse LLR station

Moreover, the daylight background noise often exceeds the return signal for green LLR observations. This introduces daily effects. An inhomogeneity of the retro-reflector tracking is present in addition to this temporal inhomogeneity, resulting in 60% of the LLR NPs being obtained on A15 (see Fig. 2). This observation is not particular to the Grasse facility but is shared in a similar way by the other LLR stations. The predominance of A15 data is not ideal for lunar libration measurements. If APOLLO is able to operate during the full Moon, a reduction of the signal strength by a factor of ten around this period is observed (Murphy et al. 2010, 2014). The authors presenting this observation proposed the presence of dust on the front surface of the corner-cube prisms as a possible explanation for the degradation of their reflectivity. The APOLLO data production is also not constant due to time-sharing with other programs and there is a gap in data at the new Moon. Considered together, these facts explain the inhomogeneity of LLR observations.

Background noise is mainly due to solar photons. The solar irradiance in infrared (IR) is approximately equal to half the irradiance in green (Zissis et al. 1993). This fact has led us to investigate whether the addition of IR detection in LLR observations can decrease these observation inhomogeneities. Lunar laser ranging in IR has already been performed but only at the Grasse laser station (Veillet et al. 1989; Mangin et al. 1989).Although promising results were obtained concerning the number of echoes, the detector performances in IR concerning the noise and the measurement precisions, were not suitable. In the following section, we briefly present the current status of the LLR ground station at Grasse and we report on the implementation of an InGaAs Single-Photon Avalanche Diode (SPAD). In Sect. 3, we present our new results obtained in IR and the comparison with those in green. Finally, in Sect. 4, we present the scientific impact resulting from this change of wavelength.

2. Lunar laser ranging ground station at Grasse

In France, the first echoes on the lunar reflectors were obtained in December 1970. A ruby laser was set on a telescope in the Pic du Midi Observatory. Due to some difficulties at Pic du Midi, a decision was taken to build an instrument dedicated to lunar laser telemetry based on a 1.5m telescope and to install it in the centre for geodynamic and astronomic studies (CERGA) (since then merged with the Nice Observatory to form the Côte d’Azur Observatory). Continuous observations were made from 1984 to 2005. The station exploited a Ruby laser operating at

Article number, page 2 of 13

C. Courde et al.: Lunar laser ranging in infrared at the Grasse laser station

694 nm until 1986, after which a Nd:YAG laser producing laser pulses at the 1064 nm wavelength was implemented. After the second harmonic generation, this laser operated at 532 nm because the green detector was the best. Since 1994 and the use of a SPAD, the measurement precision has reached the millimetric level (Samain et al. 1998). However, despite a high precision level only a small percent of LLR measurements have been obtained at the intrinsic precision of the Grasse LLR station mainly because of measurement dispersion coming from the orientation of the arrays (Samain et al. 1998). In addition, more than 60% of LLR NPs have been obtained on A15, the largest reflector. Some tests have also been performed in IR with silicium photodiodes (Samain & Mangin 1994; Schreiber et al. 1994), but at the 1994 time, the precision level of IR detection was clearly insufficient. They had also a high level of internal noise. Thus, measurement precision was limited by the detector and not by the array orientation. Moreover, IR detectors based on InGaAs or Ge technologies were very noisy compared to green detectors and required complicated cooling systems (Cova et al. 1994; Prochazka et al. 1996). Recent progress in InGaAs technology has changed this context (Itzler et al. 2011). An InGaAs/InP single-photon avalanche diode (SPAD) from Princeton Lightwave has been purchased for the Grasse station. The model is a PGA-284 mounted inside a PGA-200 housing to take advantage of the three Peltier cooling stages. The quantum efficiency is about 20% in Geiger mode and the active area has a diameter of 80 μm. The SPAD is used in gated-mode with active quenching. Characterization in the laboratory shows a dark-count rate of 28 kHz at -40^∘C with +10V applied above the breakdown voltage. The timing jitter measured in the same conditions is about 109 ps full width at half maximum (FWHM) with the use of a Dassault event timer triggered at -100 mV. This level of precision is suitable for LLR. Finally, the time-walk, which represents a SPAD bias regarding the number of photons received, is about 100 ps.decade^{−1}. The laser can be configured to generate a beacon based on a single IR wavelength or double IR & green wavelengths. We can easily measure the distances with either the two wavelengths or only in IR. Two detection channels are placed in a box at the Nasmyth table. A dichroic mirror splits the green and the IR photons of the returning beam. The spectral filtering on each channel is achieved by two filters placed in series in front of each SPAD, namely an interference filter of 6 nm FWHM bandwidth and a Fabry-Perot filter of 0.12 nm FWHM bandwidth. Calibrations of both channels are achieved thanks to a corner cube placed at the telescope output. In these conditions, the contribution of all the sub-systems of the instrument are taken into account. The width of the returns from this corner cube give the single-shot precision of the station. The center of the returns gives both the delay relating to the total delays in the instrument and two times the distance between the corner cube and the intersection of the telescope axes. Figure 3 shows the histogram of the calibrations in green and in infrared. The precision of the calibration is 74 ps RMS for the green channel and 101 ps RMS for the IR channel.

3. Results

3.1. Comparison of the different lunar retro-reflectors in infrared

3.1.1. Characteristics of the lunar retro-reflectors

Each array is an assembly of individual corner cube retroreflectors. For the Apollo arrays, each corner cube is uncoated and operated via total internal reflections (Chang et al. 1972).

Fig. 3. Histogram of the calibrations of the green and infrared detection channels. The histograms are created using a 5 ps binning. The traces in bold are a five-point moving average.

The advantage of this approach is to offer a total reflection of the incident light. As a result, the light absorption is prevented, guaranteeing smaller thermal gradients within the corner cube when they are illuminated by the sunlight. The corner cubes are circular with a 38 mm diameter. The arrays A11 & A14 are identical squares of size 46cm x 46cm. The 100 corner cubes are distributed on 10 rows and 10 columns. The Apollo 15 array is composed of 300 corner cube retro-reflectors shared on two panels: one with 204 corner cube reflectors distributed on 17 columns and 12 rows ; and a second with 96 corner cube reflectors distributed on 8 columns and 12 rows. The total array dimensions are 1.05 m x 0.64 m. The Lunokhod retro-reflectors have been purchased by CNES (Fournet 1972) and are identical for the two rovers. The arrays are composed of 14 triangular corner cubes, nearly-joined and arranged on two lines, with external dimensions of 44cm x 19cm. These corner cubes are quite different from the Apollo corner cubes because they are composed of rear-reflecting silica cubes that have a triangular edge length of 10.6 cm and a silver coating on their rear faces. The corners of the triangle have been depressed so that the efficient part of the corner cube corresponds roughly to a regular hexagon with a side of 35.5mm. The Lunokhod arrays have been optimised for observations at the wavelength of a Ruby laser. The array design has been based on the assumption of the isothermal conditions. The goal of lunar day operation has been discarded because the arrays are unusable when they are lit by the sun at normal incidence. The times of day during which the array is not degraded (sunrise and sunset) were determined through thermal testing.

Table 1 summarises the efficiency reduction factor of one corner cube for each solar incident angle. The array efficiency stays above its maximal value during the twelve hours that follow the sunrise (Fournet 1972).

Article number, page 3 of 13

A&A proofs: manuscript no. article_lune_v2

Table 1. Efficiency reduction factor (η) of one Lunokhod corner cube at different solar angles (Fournet 1972)

Sun elevation night 90^∘ 85^∘ 71^∘ 42^∘ 23^∘ (zenith angle in^∘) η 0.82 0.74 0.44 0.16 0.09 0.045

3.1.2. Theoretical estimations

Using the same analysis as in (Murphy et al. 2011), we can estimate each reflector’s performance for the wavelength of 1064 nm. At normal incidence, the hexagonal reflecting area of a Lunokhod corner cube is equal to 3274 mm^2 and the Apollo corner cube has a reflective area of 1134 mm^2.The far-field diffraction peak intensity of each corner cube scales with the square of the reflecting area. Thus, each Apollo corner cube dilutes the retro-reflected light eight times more than each Lunokhod corner cube. The central intensity of the uncoated Apollo corner cube is only 27% of a perfect Airy pattern arising from a perfectly coated corner cube. Therefore, by taking into account the number of corner cubes and the central intensity of each corner cube, we obtain that the central intensity of the Lunokhod array’s reflected beam should be 3.5 times stronger than that of the A11 & A14 arrays returns and 1.2 times stronger than that of the A15 return. However, we have to take into account an average velocity aberration of 5 μrad due to the transverse motion of the Moon together with Earth rotation. The line of sight of the telescope is not perfectly aligned with the central intensity of the far-field diffraction pattern, yielding not only an attenuation which is more important for Lunokhod than Apollo corner cubes (due to the narrower diffraction pattern) but also an attenuation which will depend on the wavelength. The intensity collected by the telescope is given by the Airy pattern at an angle δ from the centre. For a corner cube with a circular aperture and an effective diameter D_{cc} this intensity is equal to

4 J^2_1 (x) x^2

, (1)

where x =^{πδDcc}_λ and J_1 is the Bessel function of the first order. D_{cc} is equal to 3.8 cm for Apollo and 6.5 cm for Lunokhod. Consequently, the signal due to an average velocity aberration of 5 μrad is 0.79 and 0.92 times the central intensity of the far-field diffraction pattern, respectively for the Lunokhod and Apollo corner cubes. Finally, by taking into account the efficiency of the arrays given above, we obtain that in IR the central intensity of the Lunokhod arrays should be 3 times stronger than the A11 or A14 arrays and should be equal to the A15 array.

central intensity L1 (or L2) array central intensity A11 (or A14) array = ( L1 re f lecting area A11 re f lecting area

)^2 · (

L1 corner cube e f f iciency A11 corner cube e f f iciency ) · ( L1 corner cube number A11 corner cube number

) · (

L1 velocity aberration e f f ect A11 velocity aberration e f f ect ) = ( 3274 1134

)^2 · (

0.82 0.27

) · ( 14 100 ) · (

0.79 0.92 ) ≈ 3, (2) central intensity L1 (or L2) array central intensity A15 array = ( L1 re f lecting area A11 re f lecting area

)^2 · (

L1 corner cube e f f iciency A11 corner cube e f f iciency ) · ( L1 corner cube number A11 corner cube number

) · (

L1 velocity aberration e f f ect A11 velocity aberration e f f ect ) = ( 3274 1134

)^2 · (

0.82 0.27

) · ( 14 300 ) · (

0.79 0.92 ) ≈ 1

3.1.3. Measurements

We compared the signal strength of the different lunar retroreflectors in infrared. These measurements are quite difficult due to the strong variations of the photon flux with the atmosphere, the stability of the telescope pointing and the elevation angle. During specific campaigns, we measured the temporal photon flux. Each retro-reflector was followed for 5 minutes in order not to be disturbed by changes in observation conditions. Table 2 gives an example of data obtained during one night near the last quarter (lunar phase of 0.79), and the corresponding photon flux ratios.

An effort was made to successively observe A11 and L2 when they were both in the dark. The photon flux ratio between L2 and A11 is supported by 13 measurement series and more than 3500s of cumulative observation time, which give a high degree of confidence in the results. For IR wavelengths, L2 is three times stronger than A11. The discrepancy with the theoretical estimation is only 2% for the L2/A11 photon flux ratio.

Photon flux ratios were calculated for consecutive observations during the same night. Using these, the flux ratios over the 9 months of observations were computed. The results from the statistical analysis are summarised in Table 3. The photon flux on A15 is three times stronger that on A11 (or A14), as expected due to the different number of corner cubes between A11 (or A14) and A15 arrays. L1 & L2 performs similarly to A15. The statistical analysis realised by distinguishing the nights where the reflectors were lit or in the dark gives similar results which are summarised in the Table 4. It is very interesting to note that we obtain a good agreement with the theoretical ratios estimated

Article number, page 4 of 13

C. Courde et al.: Lunar laser ranging in infrared at the Grasse laser station

Table 2. Measurements of the photon flux ratio between A11 & L2 in IR.

03/12/2015: Sun elevation 79.7^∘ ; lunar phase 0.793 Array A11 L2 Observation conditions dark dark Nb of measurement series 13 13 Cumulative photon number 539 1533 Cumulative observation duration (s) 3999 3545 Photon flux mean (photon.s^{−1}) 0.14 0.4 Photon flux standard deviation (photon.s^{−1}) 0.06 0.1 Photon flux max (photon.s^{−1}) 0.21 0.6 Photon flux min (photon.s^{−1}) 0.06 0.2

Photon flux ratio L2/A11 3 Dec 2015 3.1 Theoretical ratio 3

above, because the concordance is better than 1% ([(3.1-3)/3 + (3.0-3)/3 + (1-1)/1 + (1-1)/1] / 4 ∼ 0.008).

3.1.4. Comparison with results obtained with the green laser link

These results in IR can be compared to those published in (Murphy et al. 2011) for green laser link, and are summarised in the Table 5. At the Grasse station, we find similar observations for green wavelengths. The mean concordance between the experimental ratio and the theoretical ratio is at the 171% level (because [ (1.8-1)/1.8 + (0.6-0.3)/0.6 + (0.6-0.06)/0.6 + (6-1)/1 ] /4 ∼ 1.71 ]). However, the question remains as to why the estimate does not fit with APOLLO & Grasse observations at green wavelengths.

3.2. Comparison of green and infrared links

In this subsection, we compared the optical links at the wavelengths of 532 nm and 1064 nm. The number of detected photons n_{pe} is given by the link budget equation (Degnan 1993):

n_{pe} = η_q · (E_t · λ hc ) · η_t · G_t · σ · ( 1 4πR^2

)^2 · A_r · η_r · T^2_a · T_c^2, (3)

where η_q is the detector quantum efficiency, E_t is the laser pulse energy, λ the laser wavelength, h is Planck’s constant, c is the velocity of light in vaccum, η_t is the transmit optics efficiency, G_t is the transmitter gain, σ is the satellite optical cross section, R is the slant range to the target, A_r is the effective area of the telescope receive aperture, η_r is the efficiency of the receive optics, T_a is the one-way atmospheric transmission, and T_c is the one-way transmissivity of cirrus clouds. In the following subsections, we highlight the wavelength dependence of the link budget equation. Firstly, we estimate the gain obtained on the signal by changing the working wavelength from green to IR. Secondly, we present the results obtained on A15 for simultaneous measurements in green and in IR.

3.2.1. Theoretical estimation

Laser. A mode-locked pulsed Nd:YAG laser is used at Grasse for LLR. At the output of the last amplifier we observe a temporally Gaussian pulse at 1064 nm with 150 ps FWHM and an energy of 300 mJ. The repetition rate of the laser is 10 Hz. To generate green pulses, we used a lithium triborate (LBO) crystal for the second harmonic generation (SHG) that has an efficiency (η_{S HG}) of approximately 65%. The relative gain between IR and green, relating to the second term of Eq. 3, is defined as the ratio of the photon number at each wavelength:.

G_{laser}( IR green ) = nph_{1064} nph_{532} = E_t ·^{λ1064}_{hc}

E_t ·^{λ532}_{hc} · η_{S HG}

≈ 3. (4)

The use of the 1064 nm instead of the 532 nm therefore procures three times more photons.

Transmit and receive optics. The laser pulse is then brought up to the telescope output via seven mirrors. Two kinds of mirrors are used. The first are dielectric mirrors that have the same level of reflectivity in green and in IR (98% from the datasheet). The second, used for the last three mirrors, are metallic mirrors with an aluminium treatment that have a reflectivity of 95.8% for 532 nm wavelength and 94.8% for 1064 nm wavelength (from the datasheet). At the receiver, the laser echoes are reflected a second time by these three metallic mirrors before being sent to the two detectors. We can estimate an instrumental transmission efficiency (η_t in Eq. 3) in green as 0.98^7 x 0.958^3=76.3% and in IR as 0.98^7 x 0.948^3=74%. The instrumental reception efficiency (η_r in Eq. 3) is estimated in green as 0.958^3=88% and in IR as 0.948^3=85.2%. The relative gain between IR and green concerning the transmit and receive efficiency is defined as

G_{optics}( IR green ) = η^{1064}_t · η^{1064}_r η^{532}_t · η^{532}_r = 0.74 · 0.852 0.763 · 0.88

= 0.939 (5)

in the current Grasse configuration.

Beam divergence and atmospheric transmission. At Grasse, the whole aperture of the primary mirror is used to transmit both the green and the IR laser pulses. The laser beam is centrally obscured by the secondary mirror (Cassegrain configuration). This obscuration is the same for the two wavelengths and is approximately 0.2. At the telescope output, the energy distribution is uniform over the whole aperture. In far field, this distribution can be approximated by a Gaussian distribution with a beam waist ω_0 equal to the radius of the primary mirror D_{tel} /2. After a propagation in vacuum on a distance R, the radius of a Gaussian beam will be equal to: ω = Rλ πω_0 = 2Rλ πD_{tel} (6) Article number, page 5 of 13

A&A proofs: manuscript no. article_lune_v2

Table 3. Photon flux ratios between the different reflectors computed over 9 months of observations.

Photon flux ratio A15/A11 A15/A14 A15/L2 A15/L1 Mean 3.1 3.1 1 1 Number of nights 18 14 12 7 Standard deviation 0.9 1.2 0.2 0.4 Cumulative photon number 3740 3191 4255 1339 Cumulative observation duration (s) 22402 18610 15250 8427

Mean for the two reflectors in the dark 3 3.3 1 1 Number of nights 3 3 6 6

Mean for the two reflectors in the light 3.1 3.1

Number of nights 9 11

Table 4. Comparison of the different lunar retro-reflectors’ efficiency in IR

Photon flux ratio over the different lunar reflectors in IR Theoretical estimation Grasse measurements Lunokhod arrays = 3 x A11 & A14 arrays L2 array = 3.1 x A11

Lunokhod arrays = 1 x A15 array L2 array = 1 x A15 array L1 array = 1 x A15 array

A15 array = 3 x A11 & A14 arrays A15 array = 3.1 x A11 array A15 array = 3.1 x A14 array

Table 5. Comparison of the different lunar retro-reflectors efficiency in green from (Murphy et al. 2011)

Photon flux ratio over the different lunar reflectors in Green Theoretical estimation APOLLO measurements Lunokhod arrays = 1.8 x A11 & A14 arrays L1 array = 1 x A11 & A14 arrays

Lunokhod arrays = 0.6 x A15 array L1 array = 0.3 x A15 array L2 array = 0.06 x A15 array L1 array = 1 x L2 array L1 array = 6 x L2 array

Therefore at first approximation we estimated that the IR beam width will be two times larger than the green beam width, at the same distance R and for the same initial beam waist ω_0. In this situation, the energy of the IR beam will be more spatially diluted than the energy of the green beam. However, due to atmospheric turbulence outside, the limit of diffraction is not determined by the radius of the primary mirror but by the Fried parameter r_0, which depends on local atmospheric conditions. Moreover, r_0 is a function of the wavelength (Fried 1966; Hardy 1998) and changes at a rate of λ^{6/5} resulting in

r^{1064}_0 = 2^{6/5} · r^{531}_0 (7)

Therefore, after a propagation in the atmosphere through a distance R, the radius of the Gaussian beams are

ω_{532}(R) =

2Rλ_{532} πr^{532}_0

, (8)

ω_{1064}(R) =

2Rλ_{1064} πr^{1064}_0 = 2 2^{6/5} · 2Rλ_{532} πr^{532}_0 = 2 2^{6/5}

· ω_{532}(R) (9)

Due to the peak intensity of a Gaussian beam being inversely proportional to the area covered, the relative gain between IR and green concerning the divergence is defined as

G_{divergence}( IR green ) = ω^2_{532}(R)

ω^2_{1064}(R) = ( 2^{6/5} 2 )^2 ≈ 1.3 (10)

We can also estimate the difference in atmospheric transmission between the green and the IR beam at sea level (Degnan 1993). These data are summarised in Table 6. Due to the impact of the atmosphere, the gain ratio between IR and green (IR/green) is approximately (1.2)^2=1.44 at high elevation angles and approximately (1.9)^2=3.61 at low elevation angles. If we assume that the detection efficiency of the green instrumentation is similar to the IR detection efficiency, we obtain the results summarised in Table 7. The expected gains presented in Table 7 cannot be directly confirmed experimentally. They have been calculated for an optimised laser station working in either green or infrared. In practice we cannot quickly pass from one wavelength to another with all the settings optimised. In the following section, we present results obtained with a laser station set in green that has simultaneous green and IR links.

3.2.2. Comparison of simultaneous green and infrared links on A15

Strong variations of the atmospheric transmission during the day make it difficult to compare green and IR LLR measurements taken at different epochs. We chose to exploit measurements taken during the same periods of ten minutes on A15. Each detection channel has its own event timer. The pulse energy has

Article number, page 6 of 13

C. Courde et al.: Lunar laser ranging in infrared at the Grasse laser station

Table 6. Atmospheric transmission at 532 nm and 1064 nm for different elevation angles. Data are taken from (Degnan 1993) and have been calculated for an extremely clear atmosphere.

Elevation Angle (^∘)

Atmospheric Transmission at 532 nm (%)

Atmospheric Transmission at 1064 nm (%)

IR/green atmospheric transmission ratio 20 50 95 1.9 40 75 99 1.32 90 81 100 1.23

Fig. 4. Ratio of the photon flux in IR and in green for different elevation angles.

been set by changing the orientation of the LBO crystal to obtain the same number of photons in green and in infrared at the output (200 mJ and 100 mJ respectively. In these conditions a gain of a factor three related to the laser in Table 7 becomes equal to one). In the current configuration, we cannot have green and IR beams of equivalent sizes with divergence optimised for both at the same time. A set up optimised for green wavelengths leads to an IR/green transmission ratio of 0.6. Finally, taking into account telescope transmission, reception and divergence leads to an IR/green transmission ratio of 0.73. With these parameters, we estimate a total gain of IR with respect to green of 3.38 at an elevation angle of 20^∘ and 1.62 at an elevation angle of 40^∘.

We experimentally obtain a mean value of 2.1 for observations performed at an elevation angle of 40^∘ +/- 5^∘, with a quite large standard deviation value of 0.8 that reflects the strong fluctuations of the atmospheric transmission over time. The mean discrepancy with the theoretical estimation is 30%.

3.3. Statistical results over nine months

We report here our first results obtained over a period of nine months, from January to October 2015. During this period we fixed the instrumental configuration. Simultaneous observations at both wavelengths were preferred, but the SHG was removed when no data was obtained after several attempts. Figure 5 shows the NPs obtained during this period in green and in IR versus the lunar phase.

Even if a decrease in the number of LLR NPs obtained during new and full Moon periods is still visible, we now have at least obtained observations during these phases. Infrared NPs are systematically more numerous than green ones, for example 741 and 211 NPs have been obtained in IR and in green, respectively.

Fig. 5. Comparison of green and infrared NPs obtained from January to October 2015 on all the lunar retro-reflectors versus the lunar phase. New Moon matches lunar phase 0.0 and 1.0. Full Moon matches lunar phase 0.5.

Although midday observation is impossible for green detection, it is possible for those IR detections with best signal to noise ratio, thus increasing the observability duration. Indeed, observations in green during the year 2014 represent 135 hours whereas observations in IR for the January to October 2015 represent 305 hours. Thus, the observability duration has been multiplied by two for IR. We also obtained interesting results when looking at the observation distribution on the different reflectors (see Fig. 6). The comparison of the green NPs distribution by target in 2014 and 2015 are quite similar and have a high A15 predominance. This indicates that the inhomogeneity of LLR observations on the different targets does not change during years with green link. On the contrary, IR link obtains a better homogeneity in the targets followed. Even if A15 remains the most observed target, we have obtained very strong links on the Lunokhod arrays in IR.

The distribution of numbers of NPs versus the lunar phases for each array is also very informative. In Fig. 7, the gain of IR on green is evident on Lunokhod. Lunokhod arrays have not been designed to work when they are illuminated by the sunlight. That is why Lunokhod observations are impossible at full Moon, whatever the wavelength. The 3D representation in Fig. 8 and Fig. 9, shows the impact of the sun elevation on the reflector. In IR, we obtained NPs on L2 for a solar elevation on the array of 20^∘. Considering data published in (Fournet 1972), our measurements indicate that we are able to obtain IR echoes despite an efficiency factor reduced to 0.045 (Table 1). These measurements indirectly confirm the expected gains summarised in Table 7. As expected the gain is smaller for A15 (Fig. 10) but the IR contribution is larger at the new and full Moon periods.

IR detection has enabled an increase in the number of retroreflectors followed during the same lunar observation. In 2014 with green link, we had just one night with NPs on all the lunar retro-reflectors. In 2015 with IR link, this number increased to twenty.

3.4. Normal point precision and statistical centroid uncertainty

The precision of LLR NPs is the result of combining all the different uncertainty sources involved in LLR measurements. In (Samain et al. 1998), all those different uncertainty sources are described. Two main sources can be distinguished, namely the instrumental sources and the retro-reflector array orientation.

Article number, page 7 of 13

A&A proofs: manuscript no. article_lune_v2

Table 7. Expected relative gain between IR and green on the signal received

Expected gain in IR compared to green link Elevation angle 20^∘ 40^∘ Retro-reflector A11/A14/A15 L1/L2 A11/A14/A15 L1/L2 Laser 3 3 Transmit and receive optics 0.939 0.939 Divergence 1.3 1.3 Atmospheric transmission (1.9)^2 (1.32)^2 Velocity aberration 1.28 2.14 1.28 2.14 Total gain IR/green 16.9 28.3 8.2 13.7

Fig. 6. Comparison of the Grasse NPs distribution on the different lunar retro-reflectors in infrared and in green for the first nine months 2015.

Table 8. Number of nights (inside one lunar cycle) on which different lunar reflectors have been successfully observed.

Number of different retro-reflectors followed during the night

Green LLR 2014 night number

IR LLR 2015 night number 5 1 20 4 11 8 3 14 18

Fig. 7. Comparison of green and infrared NPs obtained from January to October 2015 on L2 versus the lunar phase. New Moon matches lunar phase 0.0 and 1.0. Full Moon matches lunar phase 0.5.

Because the return detection operates in a single photon mode, an orientation difference between the normal axis of a retroreflector array and the axis defined by the direction (retroreflector array, telescope) will introduce a dispersion in the measurements. This orientation difference depends on the lunar libration, and the initial orientation of the panel as compared to the mean orientation of the Earth centre as seen from the Moon. Therefore, the NP precision depends strongly on the libration. The correlation between the theoretical and the observed precisions on A15 versus the lunar libration can be found in (Samain et al. 1998). The libration effect on the A15 orientation lies in an interval from 0 to 350 ps, which is 0 to 150 ps for other retro-reflectors. During an LLR observation we can consider the retro-reflector orientation as fixed. The single-shot precision of the station obtained by calibration ranging gives the combined precision of all the instrumental error sources, which Fig. 3 shows are equal to 74 ps RMS for the green channel and 101 ps RMS for the IR channel. The time stability of the green and IR calibrations shows a white-phase noise during a typical LLR observation time. During an LLR observation where the retro-reflector dispersion is equal to zero, we should have a NP precision close to the singleshot precision of the calibration because the atmosphere effect on the path fluctuation is in the range of units of picoseconds (Kral et al. 2005). The NP statistical centroid uncertainty σ_r is given by the Eq. 11, with N_{count} the number of measurements during the LLR observation:

σ_r = ( σ_{single shot precision} √ N_{count}

). (11)

The σ_r value in picoseconds can be expressed as a one-way range uncertainty σ_{mm} in mm with σ_{mm} = σ_r · c/2. Because the single-shot precision of the IR channel is larger than the green one, more measurements are needed in IR to obtain the same

Article number, page 8 of 13

C. Courde et al.: Lunar laser ranging in infrared at the Grasse laser station

Fig. 8. Distribution of the NPs on L2 in IR versus the lunar phase and the Sun elevation on the reflector. New Moon matches lunar phase 0.0 and 1.0. Full Moon matches lunar phase 0.5.

NP statistical centroid uncertainty. Using Eq. 11 and the singleshot precision of each detection channel, we calculate that the number of IR counts should be equal to two (^{1012}_{742} ≈ 2) times the number of green counts. Moreover, 230 counts and 124 counts are respectively needed in IR and in green to reach a millimetric one-way range uncertainty.

Figure 11 presents an example of LLR measurements on A15 simultaneously in green and in IR. We see that the noise is smaller for the IR detection channel. The precisions in green and in IR are equivalent. Two times more counts have been obtained in IR, allowing a better one-way range uncertainty to be obtained.

Figure 12 presents the distribution of the green and IR NPs in 2015 versus their one-way range uncertainties. The maximum of the IR distribution is at the three millimetre level compared to five millimetre for green. This improvement is explained by two points. Firstly, more counts are obtained in IR during an LLR observation, leading to better one-way range uncertainties. Secondly, more NPs are obtained on the L1 and L2 retro-reflectors that are less dispersive than A15 due to their smaller size. Therefore, IR detection gives more precise NPs than those obtained in green.

Figure 13 presents the histogram of LLR measurements on L1 in IR on 15 Jan 2016. The sigma of the measurements is in the range of the single-shot precision of the calibration. We obtain a one-way range uncertainty better than 1 millimetre because we collected 278 counts.

From March 2015 to May 2016, we obtained four NPs in IR with sub-millimetric one-way range uncertainty. These results are reported in Table 9. Unlike at the APOLLO station, sub-mm one way range uncertainty data is not routinely available with green detection at Grasse. However, this data is now accessible with IR detection at Grasse. Table 10 summarises the results obtained at Grasse over more than one year in green and in IR. The impact of IR on the NP number, on the count number per NP, and on the one-way range uncertainty are all positive. Because the single-shot precision of the calibration is larger in IR than green, it is not surprising to have an NP sigma that is a little bit larger in IR. Finally, the IR impact is very impressive on L2 meaning that the Grasse station NPs are a little bit more accurate than APOLLO NPs.

4. Scientific impact

IR detection has a significant impact on the number of echoes obtained in LLR and the improved returns obtained on the Lunokhod arrays will have a valuable impact on LLR research. Due to their smaller size, the Lunokhod arrays give NPs with the best precision, such that the NPs standard deviation on L1 & L2 is two times lower than these obtained on A15. The larger number of observations on the Lunokhod arrays should improve the precision of scientific products obtained as a result of LLR data. Knowledge of the Moon’s orientation is crucial for studying many aspects of gravity and the internal structure of the Moon. Using the five reflectors during the same lunar observation doubles the number of independent constraints on the deformation models that are needed to constrain models of the Moon’s tidal deformations (Williams & Boggs 2015). The IR detection on the Grasse station now gives us this capability, except around

Article number, page 9 of 13

A&A proofs: manuscript no. article_lune_v2

Fig. 9. Distribution of the NPs on L1 in IR versus the lunar phase and the Sun elevation on the reflector. New Moon matches lunar phase 0.0 and 1.0. Full Moon matches lunar phase 0.5.

Table 9. Normal point with sub-millimetric one-way range uncertainty.

Date Array

Number of IR counts NP sigma (ps)

NP one-way range uncertainty (mm) 7 Sep 2015 L2 475 129 0.9 4 Dec 2015 L1 297 114 1 15 Jan 2016 L1 278 94 0.8 14 Mar 2016 L1 474 114 0.8

Fig. 10. Comparison of green and infrared normal points obtained from January to October 2015 on A15 versus the lunar phase. New Moon matches lunar phase 0.0 and 1.0. Full Moon matches lunar phase 0.5.

full Moon at which point the Lunokhod arrays are unusable both in green and in IR. The Lunokhod arrays provide sensitivity to both longitudinal and latitudinal librations. This is an advantage over the Apollo reflectors that tend to be sensitive only to longitudinal librations. The fact that L2 responds as well as L1 in IR should help to enforce lunar libration constraints on selenophysical models. The change from green to IR wavelengths could also be beneficial for the test of the equivalence principle (EP). It is currently difficult to clearly extract an EP-violating signal which is synodic, because LLR data obtained with green detection do not uniformly sample the synodic month cycle. Moreover, the full potential of the EP test is not exploited with LLR because at the epochs of possible maximum amplitude there are either no (new Moon) or fewer (full Moon) observations (Hofmann et al. 2010). Infrared detection now gives us the ability to observe during all the lunar phases. In this way, we follow the LLR observation recommendations (Müller & Nordtvedt 1998) and reach this objective. Finally, the implementation of IR detection in other LLR stations, that are either in development or already opera-

Article number, page 10 of 13

C. Courde et al.: Lunar laser ranging in infrared at the Grasse laser station

Fig. 11. Two-colour LLR measurement on A15, performed on 13 Jan 2016 at 15H59 UTC. The upper part shows the green and IR counts as obtained in realtime. The lunar returns are the two tracks which are clearly separated from the noise. The scale of the residual is arbitrary. The IR counts are offset from the green counts to improve their visibility. The lower part shows the histogram of the IR and green counts. The histograms are created using 50 ps bins. The traces in bold are a five-point moving average. The two peaks present for the green are due to a data-binning effect.

Article number, page 11 of 13

A&A proofs: manuscript no. article_lune_v2

Table 10. Statistical results over the 11 Mar 2015 - 17 May 2016 period

Number of Median of Median of Median of Median of NPs count number NP σ NP one-way NP one-way per NP (ps) range range uncertainty uncertainty at the (mm) APOLLO station (Murphy et al. 2012) (mm) Array green IR green IR green IR green IR green A11 27 135 25 40 156 163 5.2 3.9 2.4 A14 19 97 25 40 163 178 4.7 3.9 2.4 A15 137 575 33 53 255 271 6.6 5.6 1.8 L1 9 172 15 43 100 142 3.4 3.2 2.7 L2 1 188 6 60 165 153 10.1 2.9 3.3

Fig. 12. Distribution of the green and IR NPs in 2015 versus their oneway range uncertainties.

Fig. 13. Histogram of LLR measurements on L1 in IR on 15 Jan 2016. The histogram is created using 50 ps bins. The trace in bold is a fivepoint moving average.

tional, should lead to an overall improvement. Simulations in (Hofmann et al. 2013; Viswanathan et al. 2016) show that the observation of as many reflectors as possible during an LLR session (i.e. using the usual five lunar reflectors) will increase the accuracy of estimated parameters such as position and velocities for lunar orbit and rotation, reflector and station coordinates, some lunar gravity field coefficients, tidal parameters, and the mass of the Earth-Moon system by a factor of between 1.8 to 4.6. Moreover, adding an LLR station in the southern hemisphere would lead to an improvement of about 10%-15% for the considered parameters, as demonstrated in (Fienga et al.

2014a). An error analysis based on the locations of McDonald and Grasse laser stations shows that the addition of one or more reflectors on Moon’s surface would improve the geometrical precision of NP by a factor of 1.5 to nearly 4 at the same level of ranging (Merkowitz et al. 2007). At the time of the publication of (Merkowitz et al. 2007), L1 was lost. The rediscovery of L1 coupled with IR detection would help to reach this level of improvement.

5. Conclusions

The implementation of IR detection for LLR provides new opportunities for the improvement of scientific products. As expected, LLR in infrared increases the station efficiency by a factor of eight during new and full Moon periods and improves the temporal homogeneity of LLR observations over a synodic month. The best link budget at this wavelength results in a significant increase of the NPs over all the reflectors on the Moon. Our observations are statistically more homogenous over all the targets. A surprising result concerns the L2 array behaviour in IR. The degradation of L2 performances compared to L1 seems to be chromatic because the significant difference observed in green at Grasse and APOLLO is absent in IR. Although this difference remains unexplained, the differential reflectivity at those two separate wavelengths gives new insights to analyse the performances of lunar retro-reflectors.

Acknowledgements. We thank the INSU-CNRS and the CNES for their support.

References

Battat, J. B. R., Murphy, T. W., Adelberger, E. G., et al. 2009, Publications of the Astronomical Society of the Pacific, 121, 29 Chang, R. F., Alley, C. O., Currie, D. G., & Faller, J. E. 1972, in Space Research Conference, Vol. 1, 247–259 Cova, S., Lacaita, A., Lovati, P., & Zappa, F. 1994, in Proceedings of the 9th International Workshop on Laser Ranging Instrumentation., Canberra, Australia, Vol. 2, 475–482, http://ilrs.gsfc.nasa.gov/about/reports/workshop/lw09.html Degnan, J. J. 1993, Contributions of space geodesy to geodynamics: technology, 133 Fienga, A., Courde, C., Torre, J. M., et al. 2014a, ArXiv e-prints 1405.0473, http://cdsads.u-strasbg.fr/abs/2014arXiv1405.0473F Fienga, A., Laskar, J., Exertier, P., Manche, H., & Gastineau, M. 2014b, arXiv preprint arXiv:1409.4932 Fournet, M. 1972, in Space Research Conference, Vol. 1, 261–277 Fried, D. L. 1966, JOSA, 56, 1372 Hardy, J. W. 1998, Adaptive optics for astronomical telescopes (Oxford University Press on Demand)

Article number, page 12 of 13

C. Courde et al.: Lunar laser ranging in infrared at the Grasse laser station

Hofmann, F., Müller, J., & Biskupek, L. 2010, Astronomy & Astrophysics, 522, L5 Hofmann, F., Müller, J., Biskupek, L., Mai, E., & Torre, J. 2013, in Proceedings of the 18th International Workshop on Laser Ranging, Fujiyoshida, Japan, Vol. 11, 15 Itzler, M. A., Jiang, X., Entwistle, M., et al. 2011, Journal of Modern Optics, 58, 174 Kral, L., Prochazka, I., & Hamal, K. 2005, Optics letters, 30, 1767 Mangin, J., Dumoulin, C., & Veillet, C. 1989, in Proceedings of the 7th International Workshop on Laser Ranging Instrumentation., Matera, Italy, 215–218, http://ilrs.gsfc.nasa.gov/about/reports/workshop/lw07.html Marty, J., Loyer, S., Perosanz, F., et al. 2011, in 3rd International Colloquium Scientific and Fundamental Aspects of the Galileo Programme, ESA Proceedings WPP326, Vol. 31 Merkowitz, S. M. 2010, Living Rev. Relativity, 13, 1 Merkowitz, S. M., Dabney, P. W., Livas, J. C., et al. 2007, International Journal of Modern Physics D, 16, 2151 Müller, J., Murphy, T. W., Schreiber, U., et al. 2012, Journal of Geodynamics Müller, J. & Nordtvedt, K. 1998, Physical Review D, 58, 062001 Murphy, T., Adelberger, E., Battat, J., et al. 2010, Icarus, 208, 31 Murphy, T., McMillan, R., Johnson, N., & Goodrow, S. 2014, Icarus, 231, 183 Murphy, T. W. 2013, Reports on Progress in Physics, 76, 076901 Murphy, T. W., Adelberger, E. G., Battat, J. B. R., et al. 2012, Classical and Quantum Gravity, 29, 184005 Murphy, T. W., Adelberger, E. G., Battat, J. B. R., et al. 2011, Icarus, 211, 1103 Nordtvedt, K. 1998, Classical and Quantum Gravity, 15, 3363 Prochazka, I., Greene, B., Kunimori, H., & Hamal, K. 1996, Optics letters, 21, 1375 Samain, E. & Mangin, J. 1994, in Proceedings of the 9th International Workshop on Laser Ranging Instrumentation., Canberra, Australia, Vol. 2, 449– 459, http://ilrs.gsfc.nasa.gov/about/reports/workshop/lw09.html Samain, E., Mangin, J., Veillet, C., et al. 1998, Astronomy & Astrophysics, 130, 235 Schreiber, U., Haufe, K., Mangin, J., Torre, J., & Veillet, C. 1994, in Proceedings of the 9th International Workshop on Laser Ranging Instrumentation., Canberra, Australia, Vol. 1, 303–310, http://ilrs.gsfc.nasa.gov/about/reports/workshop/lw09.html Veillet, C., Mangin, J., & Torre, J. 1989, in Proceedings of the 7th International Workshop on Laser Ranging Instrumentation., Matera, Italy, 261–266, http://ilrs.gsfc.nasa.gov/about/reports/workshop/lw07.html Viswanathan, V., Fienga, A., Courde, C., et al. 2016, in EGU General Assembly Conference Abstracts, Vol. 18, 13995 Viswanathan, V., Fienga, A., Laskar, J., et al. 2015, IAU General Assembly, 22, 2228567, http://cdsads.u-strasbg.fr/abs/2015IAUGA..2228567V Williams, J. G. & Boggs, D. H. 2015, Journal of Geophysical Research: Planets, 120, 689 Williams, J. G., Turyshev, S. G., & Boggs, D. H. 2012, Classical and Quantum Gravity, 29, 184004 Zissis, G. J., Accetta, J. S., & Shumaker, D. L. 1993

Article number, page 13 of 13