arXiv:1708.01623v2 [astro-ph.HE] 29 May 2018

June 1, 2018 Preprint typeset using L^ATEX style AASTeX6 v. 1.0

LIGHT CURVES OF HYDROGEN-POOR SUPERLUMINOUS SUPERNOVAE FROM THE PALOMAR TRANSIENT FACTORY

Annalisa De Cia^{1,2}, A. Gal-Yam^1, A. Rubin^1, G. Leloudas^{1,3}, P. Vreeswijk^1, D. A. Perley^4, R. Quimby^{5,6}, Lin Yan^{7,8}, M. Sullivan^9, A. Flörs^2, J. Sollerman^{10}, D. Bersier^4, S. B. Cenko^{11,12}, M. Gal-Yam^{13}, K. Maguire^{14}, E. O.

Ofek^1, S. Prentice^4, S. Schulze^1, J. Spyromilio^2, S. Valenti^{20}, I. Arcavi^{15,16}, A. Corsi^{17}, D. A. Howell^{15,16}, P. Mazzali^{4,18}, M. M. Kasliwal^{19}, F. Taddia^{10}, O. Yaron^1

1 Department of Particle Physics and Astrophysics, Weizmann Institute of Science, Rehovot 76100, Israel 2 European Southern Observatory, Karl-Schwarzschild Str. 2, D-85748 Garching bei München, Germany, adecia@eso.org 3 Dark Cosmology Centre, Niels Bohr Institute, University of Copenhagen, Juliane Maries Vej 30, DK-2100, Copenhagen, Denmark 4 Astrophysics Research Institute, Liverpool John Moores University, Liverpool Science Park, 146 Brownlow Hill, Liverpool L35RF, UK 5 Department of Astronomy, San Diego State University, San Diego, CA 92182, USA 6 Kavli IPMU (WPI), UTIAS, The University of Tokyo, Kashiwa, Chiba 277-8583, Japan 7 MS100-22, Caltech/IPAC, California Institute of Technology, Pasadena, CA 91125, USA 8 Caltech Optical Observatories, California Institute of Technology, Pasadena, CA 91125, USA 9 Department of Physics and Astronomy, University of Southampton, Southampton SO17 1BJ, UK 10 The Oskar Klein Centre, Department of Astronomy, Stockholm University, AlbaNova, SE-10691, Stockholm, Sweden 11 Astrophysics Science Division, NASA Goddard Space Flight Center, Mail Code 661, Greenbelt, MD 20771, USA 12 Joint Space-Science Institute, University of Maryland, College Park, MD 20742, USA 13 The Schwartz/Reisman Science Education Center, Weizmann Institute of Science, Rehovot, Israel 14 Astrophysics Research Centre, School of Mathematics and Physics, Queens University Belfast, Belfast BT7 1NN, UK 15 Las Cumbres Observatory, 6740 Cortona Dr. Suite 102, Goleta, CA 93117, USA 16 Department of Physics, University of California, Santa Barbara, CA 93106-9530, USA 17 Department of Physics and Astronomy, Texas Tech University, Box 1051, Lubbock, TX 79409-1051, USA 18 Max-Planck-Institut für Astrophysik, Karl-Schwarzschild-Str. 1, D-85748 Garching, Germany 19 Astronomy Department, California Institute of Technology, Pasadena, CA 91125, USA 20 Department of Physics, University of California, Davis, CA 95616, USA

ABSTRACT We investigate the light-curve properties of a sample of 26 spectroscopically confirmed hydrogen-poor superluminous supernovae (SLSNe-I) in the Palomar Transient Factory (PTF) survey. These events are brighter than SNe Ib/c and SNe Ic-BL, on average, by about 4 and 2 mag, respectively. The peak absolute magnitudes of SLSNe-I in rest-frame g band span −22 ≲ M_g ≲ −20 mag, and these peaks are not powered by radioactive^{56}Ni, unless strong asymmetries are at play. The rise timescales are longer for SLSNe than for normal SNe Ib/c, by roughly 10 days, for events with similar decay times. Thus, SLSNe-I can be considered as a separate population based on photometric properties. After peak, SLSNe-I decay with a wide range of slopes, with no obvious gap between rapidly declining and slowly declining events. The latter events show more irregularities (bumps) in the light curves at all times. At late times, the SLSN-I light curves slow down and cluster around the^{56}Co radioactive decay rate. Powering the late-time light curves with radioactive decay would require between 1 and 10M_⊙ of Ni masses. Alternatively, a simple magnetar model can reasonably fit the majority of SLSNe-I light curves, with four exceptions, and can mimic the radioactive decay of^{56}Co, up to ∼ 400 days from explosion. The resulting spin values do not correlate with the host-galaxy metallicities. Finally, the analysis of our sample cannot strengthen the case for using SLSNe-I for cosmology.

1. INTRODUCTION Since the advent of wide-field untargeted transient surveys, a class of superluminous supernovae (SLSNe) that are over 10 times more luminous than regular SNe (see Gal-Yam 2012, for a review), with absolute magnitudes ≲ −21 mag, has emerged. The first few objects showed a striking diversity, e.g. SN 2005ap (Quimby et al. 2007), SN 2006gy (Ofek et al. 2007; Smith et al. 2007), and SN 2007bi (Gal-Yam et al. 2009), leading to a natural division between H-rich events (SLSNe-II) and H-poor events (SLSNe-I). Most SLSNe-II show narrow lines (SLSN-IIn) and are powered by the interaction of the SN ejecta with the circumstellar medium (CSM; e.g., Chugai & Danziger 1994; Chevalier & Fransson 1994; Chevalier & Irwin 2011; Ofek et al. 2013; Inserra et al. 2018). SLSNe-I are less well-understood, and the physical processes that dominate these explosions are still under debate.

Quimby et al. (2011) inspected the first sample of SLSNe-I, and found that they have UV-bright light curves over extended periods of time. Quimby et al. also showed similarity in their spectral features, and suggested that their progenitors may have initial masses 90 < M < 130 M_⊙, perhaps exploding as core-collapse SNe with massive ejecta interacting with a H-poor CSM. Asymmetry in the ejecta can hide signatures of hydrogen or helium in SLSN-I spectra (Kozyreva & Blinnikov 2015), as well as ionization (Mazzali et al. 2016). Gal-Yam (2012) proposed that a group of slowly declining events (SLSNe- R), similar to SN 2007bi, have late-time light curves that are powered by radioactivity and could be associated with pair-instability SNe (PISN; Barkat et al. 1967; Heger & Woosley 2002; Gal-Yam et al. 2009), but this is widely debated (Dessart et al. 2012; Nicholl et al. 2013). Inserra et al. (2013) showed that the late-time decay of a few SLSNe slows down to a ’tail’ that could be explained if the light curves were powered by the spin-down of a newly born magnetar (Kasen & Bildsten 2010). Nicholl et al. (2015a) studied a sample of SLSNe and suggested that the ejecta mass is the main driver of the observed diversity. More recently, Nicholl et al. (2017) fitted a magnetar model to the literature sample of SLSNe-I.

Early-time bumps (pre-peak or double peaks, or excess emission) have been observed in some SLSNe light curves, such as SN 2006oz (Leloudas et al. 2012), LSQ 14bdq (Nicholl et al. 2015b), PTF 12dam and iPTF 13dcc (Vreeswijk et al. 2017), and DES 14X3taz (Smith et al. 2016). These early bumps can be explained by shock-cooling or CSM interaction models (e.g Nakar & Sari 2010; Rabinak & Waxman 2011; Chatzopoulos et al. 2012; Piro 2015). Such early bumps or double-peaked light curves may in fact be common among SLSNe (Nicholl & Smartt 2016). Latetime bumps (postpeak) have also been observed in a few cases, such as for SN 2007bi (Gal-Yam et al. 2009), iPTF 13ehe (Yan et al. 2015), PS1-14bj (Lunnan et al. 2016), and SN 2015bn (Nicholl et al. 2016). Wiggles in the late-time decay have often been observed in a handful of slowly declining SLSNe by Inserra et al. (2017). Such late-time bumps cannot be explained by magnetar and radioactive decay models. Late-time emergence of hydrogen emission has been detected in a few cases (e.g., iPTF 15esb; Yan et al. 2015, 2017), and in these cases it was explained with substantial mass loss that occurred shortly before the progenitors of the SLSNe exploded (Yan et al. 2015, 2017). Indeed, Liu et al. (2017) showed that the light curves of iPTF 15esb could be explained with a multiple-shell CSM interaction model. The diversity observed so far in H-poor SLSNe seems to indicate that multiple processes may contribute to powering their light curves.

In this paper, we present a sample of 26 SLSNe-I from the Palomar Transient Factory (PTF; Law et al. 2009; Rau et al. 2009) and its successor the intermediate Palomar Transient Factory (iPTF). This is the largest sample of SLSNe-I homogeneously selected from a single survey available so far. Here we characterize and discuss the properties of the light curves of these events, and compare them to a large PTF sample of SNe Ib/c and Ic-BL (with broad lines). We address the question on how luminous SLSNe-I are, and whether they can be considered a separate population based on their lightcurve properties. We investigate whether Type SLSNe- R are a separate class of events, and whether we can use SLSNe-I for cosmology. The spectra of (i)PTF SLSNe, and the host galaxies of PTF SLSNe up to 2012 are studied in Quimby et al. (2018) and Perley et al. (2016), respectively.

The paper is organized as follows. In Sect. 2 and 3 we describe the SLSN sample and observations, respectively. We characterize the SN light curves in Sect. 4, discuss our results in Sect. 5, and present our conclusions in Sect. 6. We adopt the cosmological parameters H_0 = 70 km s^{−1} Mpc^{−1}, Ω_m = 0.3, and Ω_Λ = 0.7 throughout the paper.

2. THE PTF SAMPLE OF SLSNE PTF was a wide-field (7.26 deg^2 field of view), nontargeted survey designed to investigate the optical transient and variable sky (Law et al. 2009; Rau et al. 2009), carried out using the refurbished CF H12k camera (Rahmer et al. 2008), mounted on the Palomar Observatory 48-inch Samuel Oschin Telescope (P48), in California. The PTF survey is optimized for the discovery of SNe of different types. Since its start in 2009, PTF has discovered and classified over 3000 SNe. The classification and follow-up observations of these SNe are performed through a wide network of telescopes (Gal-Yam et al. 2011), as described below for our sample. The selection of SN candidates for spectroscopic classification within the PTF survey is not free of biases. For example, SLSN searches may have given more weight to candidates that were brighter than their host galaxies. Nevertheless, PTF has discovered a large number of SLSNe-II as well, which can explode in normal host galaxies (e.g. Perley et al. 2016), reassuring us that such selection biases are not dominant.

The 26 SLSNe discussed in this paper are all the hydrogen-poor SLSNe discovered between 2009 and 2013 by the (i)PTF survey. The sample is shown in Table 1. This significantly increases the sample of about 50 currently known H-poor SLSNe with reported spectral classification in the literature (either published or with spectra reported in Astronomer’s Telegrams; e.g. Nicholl et al. 2015a; Schulze et al. 2018; Lunnan et al. 2018), 10 of which have been discovered by PTF and are part of this work as well.

The PTF SLSNe in our sample have been spectroscopically classified as SLSNe-I by Quimby et al. (2018). This sample is thus spectroscopically selected and assumes no luminosity thresholds. The sample of PTF SLSN host galaxies of Perley et al. (2016) is slightly different because that work also applied a luminosity cut, while PTF 12hni and PTF 12gty are presented here for the first time. PTF 12hni is classified as an SLSN-I by Quimby et al. (2018) with some uncertainty, and having possible matches to SN Ia and SN Ic. In addition, three other events are reported as possible SLSNe by Quimby et al. (2018), namely PTF 09q, PTF 10gvb, and PTF 11mnb, but are most likely not SLSNe, and therefore we do not include these in our sample.^1 What makes the PTF sample unique is not only the fact that it is homogeneously selected from a single survey, but also that its average redshift is low (< z > = 0.27; see Sect. 2.1). A higher-z (0.3 < z < 1.6) sample of 17 SLSNe-I from the Pan-STARRS1 Medium Deep Survey (PS1; Kaiser et al. 2010) is presented by Lunnan et al. (2018). In addition, the light-curve coverage of the PTF sample often extends to late times, beyond 100 days after the peak for half of the sample. The currently known H-poor SLSNe in the literature typically lack photometry later than 120 days after peak (e.g. Nicholl et al. 2015a). Jerkstrand et al. (2017) and Inserra et al. (2017) have studied a small sample of slowevolving SLSNe, with data coverage up to 400 days after peak.

As a comparison sample, we also select all Type Ib, Ib/c, Ic, and Ic-BL SNe discovered between 2009 and

1 For PTF 09q there is a single spectrum available, which is well consistent with an SN Ic, and its host galaxy is a massive galaxy (Quimby et al. 2018). Three spectra are available for PTF 10gvb, but one is mostly featureless and lacks the typical SLSN O ii features, and the the other two are well-matched with an SN Ic-BL (Quimby et al. 2018). PTF 11mnb is most likely a SN Ic, as studied in detail by Taddia et al. (2018a).

Table 1. The PTF sample of 26 hydrogen-poor SLSNe.

PTF R.A. Decl. z Type A^a_V ID (hh:mm:ss) (^∘ :^′ :^{′′}) (mag) 09as 12:59:15.78 +27:16:38.5 0.1864 I 0.02 09atu 16:30:24.55 +23:38:25.0 0.5014 I 0.13 09cnd 16:12:08.94 +51:29:16.2 0.2585 I 0.06 09cwl 14:49:10.08 +29:25:11.4 0.3502 I 0.04 10aagc 09:39:56.93 +21:43:16.9 0.2067 I 0.07 10bfz 12:54:41.27 +15:24:17.0 0.1699 I 0.05 10bjp 10:06:34.30 +67:59:19.0 0.3585 I 0.17 10cwr 11:25:46.67 −08:49:41.2 0.2301 I 0.10 10hgi 16:37:47.04 +06:12:32.3 0.0982 I 0.22 10nmn 15:50:02.79 −07:24:42.1 0.1236 I/R 0.42 10uhf 16:52:46.68 +47:36:22.0 0.2879 I 0.05 10vqv 03:03:06.84 −01:32:34.9 0.4520 I 0.17 10vwg 18:59:32.86 +19:24:25.7 0.1901 I/R 1.41 11dij 13:50:57.77 +26:16:42.8 0.1429 I 0.03 11hrq 00:51:47.22 −26:25:10.0 0.0571 I/R 0.04 11rks 01:39:45.51 +29:55:27.0 0.1924 I 0.11 12dam 14:24:46.20 +46:13:48.3 0.1075 I/R 0.03 12gty 16:01:15.23 +21:23:17.4 0.1768 I 0.18 12hni 22:31:55.86 −06:47:49.0 0.1056 I 0.16 12mxx 22:30:16.68 +27:58:21.9 0.3274 I 0.12 13ajg 16:39:03.95 +37:01:38.4 0.7403 I 0.04 13bdl 12:36:56.14 +13:07:45.5 0.4030 I 0.13 13bjz 10:38:19.83 +24:24:51.0 0.2712 I 0.06 13cjq 00:14:27.18 +24:17:08.8 0.3962 I 0.13 13dcc 02:57:02.50 −00:18:44.0 0.4308 I/R 0.18 13ehe 06:53:21.50 +67:07:56.0 0.3434 I/R 0.14 aGalactic foreground extinction.

2013 by PTF. These SNe are studied in more detail in Arcavi et al. (2010), Corsi et al. (2016), Prentice et al. (2016), and Taddia et al. (2018b), and will be presented in full in forthcoming publications (Barbarino et al. 2018, in preparation; Fremling et al. 2018, in preparation; Huang et al. 2018, in preparation; Karamehmetoglu et al. 2018, in preparation; Schulze et al. 2018, in preparation).

We derive the rest-frame g-band absolute magnitudes, M_g , from the apparent r magnitudes m_r including the k-correction term as K_{gr} described in Sect. 3.12 and listed in Table C2 (M_g = m_r − DM(z) − K_{gr}, where DM(z) is the distance modulus for a given redshift z, and m_r is corrected for foreground Galactic extinction, reported in Table 1). Figure 1 shows the rest-frame M_g light curves of all the 26 SLSNe in our sample.

2.1. The redshift distribution

4 De Cia et al.

Figure 1. Rest-frame M_g light curves of the 26 H-poor SLSNe in our sample. The error bars are omitted here for readability, but are shown in Figs. B1 to B5.

Although most normal SNe are observed in the nearby universe (z ≲ 0.2), the most luminous ones can be detected out to higher redshift. SNe Type Ia, for instance, are currently discovered out to z ∼ 2 in deep imaging (Jones et al. 2013). A few SLSNe have been studied out to z ∼ 4 in the deepest surveys (Cooke et al. 2012), although in limited detail compared to nearby targets.Recently, a small sample of z ∼ 2 SLSNe has been studied by Moriya et al. (2018) and Curtin et al. (2018). In the future, the James Webb Space Telescope is expected to be able to detect SLSNe out to z ∼ 20 (Abbott et al. 2017). The PTF survey typically discovers SLSNe below z ≲ 1.

The redshifts in our SLSN sample are all measured spectroscopically and normally measured from narrow Mg ii absorption lines in the SN spectra. The typical uncertainties on the redshift estimates are of the order of 0.0005, given the typical resolution of the follow-up spectra (described in Quimby et al. 2018). The redshifts in Table 1 are taken from Quimby et al. (2018) for all events up to 2012, except for PTF 10vwg for which we adopt the slightly more accurate redshift of Perley et al. (2016). We adopt the redshifts of Vreeswijk et al. (2014) for PTF 13ajg and of Yan et al. (2015) for PTF 13ehe. For the other 2013 events, we directly measure the redshifts from the Mg ii narrow absorption lines in the spectra. In PTF 13ehe, the most common spectral features are very weak. The redshift measurement is based on a weak O iii 5007 emission line, and its uncertainty is of the order of 0.001.

Figure. 2 shows the redshift distribution of our sample, where the mean redshift is < z >= 0.27 with standard deviation σ_z = 0.15. The volume-weighted mean is < z >= 0.33.^2

The mean redshift of the PTF H-poor SLSN sample presented here is comparable to the ”golden” SLSN sample of Nicholl et al. (2015a, < z >= 0.22, while < z >= 0.63 for their ”silver” sample), and the SLSN host sample of Leloudas et al. (2015, < z >= 0.34 with a standard deviation of 0.2). On the other hand, SLSNe discovered by PS1 tend to be at higher redshifts, typically z > 0.5 (McCrum et al. 2015), and in particular 0.3 < z < 1.6 (Lunnan et al. 2018).

The drop of the redshift distribution above z ∼ 0.5 in our sample is an observational selection effect due to the limiting magnitude of the PTF survey (m_{r,lim} ∼ 20.5 mag, Cao et al. 2016). This limit hampers further investigations of the evolution of the sample properties

2 A Gaussian fit through the redshift distribution data prefers a mean redshift < z >= 0.16 with a standard deviation σ_z = 0.20 for a z bin size of 0.05. The mean < z > is 0.11 and 0.17 for bin sizes of 0.01 and 0.1, respectively.

Figure 2. Redshift distribution of the sample of hydrogenpoor SLSNe presented in Table 1.

with redshift.

3. OBSERVATIONS AND DATA PROCESSING 3.1. Palomar P48 discovery and imaging As part of the standard PTF operations, SN candidates are discovered in P48 images using image subtraction in Mould-R (r) or the Sloan Digital Sky Survey (SDSS, York et al. 2000; SDSS Collaboration et al. 2016) g^′ filter. The best SN candidates are then classified spectroscopically and followed-up with other telescopes. The raw P48 images are initially processed by the Infrared Processing and Analysis Center (IPAC, Laher et al. 2014). The photometric calibration and system are described in Ofek et al. (2012). Imagesubtraction point-spread function (PSF) photometry is performed with a custom routine (a pipeline written by one of us (M.S.) and used extensively in PTF; e.g. Sullivan et al. 2006; Ofek et al. 2014a; Firth et al. 2015; Dimitriadis et al. 2017). This pipeline constructs deep reference images - either before the SN explosion or after the SN has faded - and astrometrically aligns the images using the Automated Astrometry described in Hogg et al. (2008) and the Naval Observatory Mergered Astrometric Dataset (NOMAD, Zacharias et al. 2004). The image PSFs are then matched in order to perform the image subtraction and then to extract the PSF photometry of the SN only (where the contribution of the reference image has been subtracted). The fluxes are calibrated against the SDSS Data Release 10 (Ahn et al. 2014) when available, and otherwise against the photometric catalog of Ofek et al. (2012), and making no assumption on the SLSN colors.

The formal uncertainties derived with the MS pipeline only include statistical uncertainties, but not uncertainties from poor image subtraction or calibration. As a result, the formal uncertainties are slightly underestimated. For example, under excellent data coverage, we can observe a larger scatter than that accounted for by the formal uncertainties. The best example is for iPTF 13ajg, which shows a scatter of ∼ 0.5 mag around peak. We quantify the additional source of uncertainty by assuming a χ^2_ν = 1 for the light-curve fit around the peak of iPTF 13ajg (see Sect. 4.1). The additional required uncertainty is 0.05 mag, which we add to all formal errors derived with the MS pipeline (i.e. for the data taken with the P48, P60, and LT telescopes; see below), to account for poor image subtraction or calibration.

Nondetections, and in particular the last nondetection limits before the SN discoveries, are not included in our analysis. The reason for this is that nondetections are largely dominated by noisy data and are uninformative. In addition, in most cases the SLSNe-I were discovered long after explosions. For the case of PTF 12dam coadds of the prediscovery nondetections are presented by Vreeswijk et al. (2017). The analysis presented in this paper is independent of the nondetection limits. Thus, we leave the treatment of prediscovery limits, which is beyond the scope of this paper, for future case-by-case studies.

3.2. Palomar P60 imaging Follow-up imaging was obtained with the Palomar 60-inch telescope (P60; Cenko et al. 2006). The filters employed for our observations are Johnson B (Bessell 1990), Kron R (similar to Cousins R_C , Bessell 1990), Sloan i^′ and z^′ (Fukugita et al. 1996), and Gunn g (Thuan & Gunn 1976). The SN photometry is extracted with the same routine described above for the P48 data processing, but calibrated using the AAVSO Photometric All-Sky Survey (APASS; Henden et al. 2009) for the B filter or for fields that are not covered by the SDSS footprint.

3.3. Keck/LRIS imaging We observed PTF SLSNe at late times using the Low- Resolution Imaging Spectrometer (LRIS) on the Keck I telescope to monitor the late-time evolution of the light curve or to produce a deep reference image (after the SN has faded) for image subtraction or host galaxy study (Perley et al. 2016). Images were processed using standard techniques via the custom pipeline LPIPE^3 and co-added using SWarp. Photometry was performed after image subtraction of the reference image (taken from Perley et al. 2016), with the custom-made IRAF routine

mkdifflc (Gal-Yam et al. 2004, 2008).

3.4. Liverpool Telescope imaging Follow-up imaging was also obtained with the 2m robotic Liverpool Telescope (LT; Steele et al. 2004) at

3 www.astro.caltech.edu/∼dperley/programs/lpipe.html

the Roque de los Muchachos Observatory on La Palma, Spain, with the RATCAM and IO:O optical imagers in g, r, and i filters (similar to SDSS). The images were processed following Maguire et al. (2014) and using the image-subtraction PSF photometry custom routine described above for the P48 Telescope.

3.5. Las Cumbres Observatory imaging The LCO (previously known as LCOGT; Brown et al.

2013) data have been reduced using a custom pipeline (Valenti et al. 2016). The pipeline employs standard procedures (PYRAF, DAOPHOT) in a Python framework. Host galaxy flux was removed using image subtraction technique (High Order Transform of PSF ANd Template Subtraction, HOTPANTS^4). PSF magnitudes were computed on the subtracted images and transformed to the standard SDSS filter system (for gri) via standard star observations taken during clear nights.

3.6. Discovery Channel Telescope imaging We imaged several of the SLSNe in our sample with the Large Monolithic Imager (LMI) mounted on the 4.3 m Discovery Channel Telescope (DCT) in Happy Jack, AZ. The LMI images were processed using a custom IRAF pipeline for basic detrending (bias subtraction and flat fielding), and individual dithered images were combined using SWarp (Bertin et al. 2002). SN magnitudes were measured using aperture photometry with the inclusion radius matched to the FWHM of the image PSF. Photometric calibration was performed relative to point sources from the SDSS (York et al. 2000; SDSS Collaboration et al. 2016).

No DCT reference images are available for image subtraction, so we account for the contribution of the host galaxies by subtracting the host magnitudes from the observed fluxes, and we include this into the photometric uncertainty budget. The SLSNe iPTF 13dcc and 13ehe were observed with the DCT. The host galaxy of iPTF 13dcc has B = 26.3 ± 0.2 and i = 25.0 ± 0.2 (Perley et al. 2018, in preparation), and we assume g = 26.3±0.2 and r = 25.0±0.2 for the subtraction of the host galaxy contribution to the r-band data point, which is a reasonable assumption given typical host galaxy colors (Perley et al. 2016). The host galaxy of iPTF 13ehe has B = 25.0 ± 0.1 and R = 24.0 ± 0.1. (Perley et al. 2018, in preparation), which we use to subtract the hostgalaxy contribution. For both SLSNe, this host-galaxy correction affects significantly (by 0.2 mag) only the last r-band epoch of their light curves. In both cases, the DCT data points are consistent with the photometry from other facilities, including late-time Hubble Space

4 www.astro.washington.edu/users/becker/v2.0/hotpants.html

Telescope (HST) photometry (Sec. 3.9).

3.7. Swift/UVOT imaging A number of supernovae in our sample were observed with the UltraViolet/Optical Telescope (UVOT; Roming et al. 2005) on board the Swift Gamma-ray Burst Explorer (Gehrels et al. 2004). Data were processed using the standard UVOT pipeline, and photometry was extracted at the supernova location using a 3^{′′} radius. Photometric calibration was calculated using the zero point measurements from Poole et al. (2008) and Breeveld et al. (2010). The magnitudes reported in Tables D6 to D70 are all on the AB system. No attempt has been made to correct for underlying contributions from the host galaxy emission. At these redshifts, the host galaxy contribution should not significantly affect the observed UV flux in most cases. This may not be true for some cases, in particular for PTF 12dam and its luminous underlying starburst host galaxy (Chen et al. 2015; Thöne et al. 2015; Perley et al. 2016; Cikota et al. 2017). However, even in this case, the host galaxy brightness in the F 225W filter is 19.94 ± 0.17 (Perley et al. 2016), which is 1– 2 mag fainter that the unsubtracted SN photometry (Nicholl et al. 2013; Chen et al. 2015).

3.8. Palomar P200/Large Format Camera (LFC) imaging Follow-up imaging was obtained with the Palomar 200-inch Hale Telescope with the LFC^5. The data reduction was performed with standard IRAF tasks. The SN magnitudes were derived by extracting aperture photometry at different radii, for the SN images and the reference image, and subtracting the host contribution. For the case of PTF 09cnd, we measure the photometry using both the image-subtraction routine mkdifflc and aperture photometry, and take the average between the two results. For the case of PTF 10cwr no reference image is available, so we extract aperture photometry with a 3^{′′} radius and subtract the host magnitude reported by Perley et al. (2016) and include this into the photometric uncertainty budget.

3.9. HST The SLSNe iPTF 13dcc and iPTF 13ehe were observed with the Advanced Camera for Surveys (ACS) in the Wide Field Channel on board the HST, with the F625W filter, as part of the GO-13858 program (PI A. De Cia). The data were reduced using the CALACS software, which contains corrections for degradation of the charge transfer efficiency and electronic artifacts

5 www.astro.caltech.edu/palomar/about/telescopes/hale.html

(bias-shift and -striping effects). Cosmic rays were removed using the LA Cosmic routine (van Dokkum 2001). The images were then processed with DrizzlePac 2.0,^6 with inverse variance map (IVM) weighting and assuming a pixel scale of 0.033^{′′} and a pixel fraction of 0.6.

The SN PSF is resolved from the more extended host galaxies. For iPTF 13dcc, the PSF of the host has an FWHM of 3.2 pixels (0.11^{′′} ), while field stars have 2.4 pixels (0.08^{′′} ). iPTF 13ehe is separated from its host galaxy. The SN PSFs were fitted and thus isolated from their host galaxies using a custom IDL routine. The PSF SN photometry was then extracted assuming HST zeropoints and applying a correction for an aperture of 0.5^{′′} radius.

3.10. Literature data collection We complement the photometric dataset of the SLSNe in our sample with the data published in Quimby et al. (2011), Pastorello et al. (2010), Inserra et al. (2013), Nicholl et al. (2013), Chen et al. (2015), and Vreeswijk et al. (2014). The literature photometry is showed in Figs. B1 to B5. The purpose of including the literature data in this paper is to collect the most complete available light curves for the SLSNe in our sample. The r-band photometry is used to calculate the rest-frame g-band photometry, which is reported in Tables D7 to D71. Because the sources of our observations are already diverse, the inclusion of literature data does not affect significantly the quality of our dataset.

The full light curve of PTF 10nmn will be presented by Yaron et al. (2018, in preparation), including a wider coverage of the SN peak, which is not presented in this paper.

We exclude from the analysis a couple of published photometry datapoints in cases of disagreement with the photometry secured with other (multiple) telescopes, namely for iPTF 13ajg (P60 R-band data at MJD 56429 from Vreeswijk et al. 2014, excluded) and for PTF 09cnd (Wise R-band data at MJD 55089 from Quimby et al. 2011, excluded). The new measurements supersede the earlier ones.

3.11. On the diversity of the dataset The dataset used in this paper was collected from a diversity of facilities, and the photometry is derived with different pipelines and methods. The quoted uncertainties assess the quality of the photometry for each facility or measurement method. The contribution of the host galaxy light to the SN measured flux is taken into account and reflected in the quoted uncertainties. An

6 http://drizzlepac.stsci.edu

exception to this is for the UV photometry (Swift), for which the contribution from the host galaxy is not subtracted, but should be minimal (Sect. 3.7). Often the filter transmission curves of similar filters are different for different facilities or catalogs for calibration, such as r , R, and R_c for example. However, we did not correct for these differences because they depend on the source spectra and their evolution, and these differences are typically very small, normally well below 0.1 mag.

In Figs. B1 to B5, all photometry ar shown together. When enough data are available, the photometry from different telescopes can be directly cross-checked, and we do not find evident discrepancies. Further corrections to the photometry, such as foreground extinction and kcorrections, and their uncertainties, are described below.

3.12. Foreground dust extinction and k-corrections We derive Galactic foreground optical extinction A_V using the maps of Schlafly & Finkbeiner (2011) through the Galactic Dust Reddening and Extinction Service at the NASA/IPAC Infrared Science Archive, assuming a standard extinction law and an extinction to reddening ratio A_V /E(B−V ) = 3.1.^7 The mean uncertainty in the Galactic foreground extinction A_V for our sample is of 0.009 mag, and we do not include this uncertainty in the photometric budget. The adopted A_V values are listed in Table 1. We calculate the extinction A_λ at the central wavelength of each filter using the reddening curve of Cardelli et al. (1989) and including the update for the near-UV given by O’Donnell (1994). Both apparent and absolute magnitudes reported in this paper are corrected for Galactic foreground extinction.

Host-galaxy extinction is not considered. SLSN host galaxies tend to be faint and have low metallicity (Neill et al. 2011; Leloudas et al. 2015; Lunnan et al. 2015; Perley et al. 2016; Chen et al. 2017; Schulze et al. 2018), and therefore we expect them to have negligible dust extinction in the red bands, with possible regions that may be locally more dusty, affecting mostly the UV (e.g. Cikota et al. 2017). On the other hand, SN Ib/c host galaxies can show significant extinction (mean < E(B − V ) >∼ 0.2 and < 0.6 mag for ∼80% of SNe Type Ic, Ib, and Ic-BL; Taddia et al. 2015; Prentice et al. 2016), but determining it case by case for our comparison sample is often not possible and is beyond the scope of this paper.

We calculate the k-corrections K_{gr} for the SLSN sample from observed PTF r to rest-frame g (SDSS filter system) using spectral series of PTF 12dam and

7 The background and further cautionary notes are reported at http://irsa.ipac.caltech.edu/

applications/DUST/docs/background.html

iPTF 13ajg (Vreeswijk et al. 2014, 2017; Quimby et al. 2018) and following Hogg et al. (2002). Using individual spectra for each SLSNe was not possible here, due to the paucity of sufficient spectral coverage at all epochs for the SLSNe in our sample. The spectral coverage of PTF 12 dam is frequently sampled and spans from −25 to 321 rest-frame days after the peak, while the spectra of iPTF 13ajg are reliable until 60 days after peak. In the overlapping interval, there is good agreement between the k-corrections calculated from the two series of spectra. This indicates some level of similarity between the spectra, which is also confirmed by the spectral analysis of the PTF SLSN-I sample (Quimby et al. 2018). The spectra of the more slowly evolving SLSNe-I change more slowly. However, the k-corrections based on PTF 12dam and iPTF 13ajg are similar, so the differences in k-corrections for faster and slower SLSNe-I should be small. Given this similarity, and due to the general lack of spectral series as complete as those for PTF 12dam, we apply the k-corrections derived from the spectra of PTF 12dam and their evolution to all of the SLSNe in our sample.

The spectra were not warped to match the observed photometry of the individual SLSNe. This could have led to more accurate k-corrections. However, the uncertainty from the fact that we use the spectrum of PTF 12dam as a reference for the k-correction for all individual SLSNe is likely larger than the precision that could be gained by such a procedure. In addition, to make a reliable warping, photometry in at least two bands (and much preferably three) would be necessary, and this was not always available. The spectra of PTF 12dam themselves were carefully flux calibrated. To ensure a smooth evolution of the k-correction with time, we interpolate the individual k-correction values and obtain a smooth k-correction evolution in time for each SLSN, through a third-order polynomial fit of the individual k-correction values.

The residuals from the third-order polynomial fit of the k-correction values with time can be used to estimate the uncertainties on the k-corrections, which are between 0.004 and 0.05 mag in our sample, with an average of 0.02 mag. These values show the scatter around the best-fit k-correction curve. Fitting the k-correction through individual points ensures that potential outliers, e.g. due to inaccurate flux calibration of the reference spectra, become negligible because the fit is driven by the majority of the points. The dominant source of uncertainty on the k-correction is likely the fact that we use the spectrum of PTF 12dam as a reference for the k-correction for all SLSNe, but this cannot be trivially estimated. Using different SLSN spectra as a reference for the k-correction in a different but comparable sample of SLSNe, the uncertainties on the k-corrections are

0.01–0.1 mag (Wiis, private communication, MSc thesis, Table 4.1.1), although these are potentially slightly overestimated because they are derived with linear fits to the k-correction data. We do not include the uncertainties on the k-correction in our photometry uncertainty budget.

Table C2 lists the values of the adopted smooth kcorrection at the epochs of the PTF 12dam spectra, applied to the redshifts of the SLSNe of our sample. Our k-correction values are in agreement with those of Nicholl et al. (2015b, K_{gr} = −0.3 before peak for LSQ 14bdq at z = 0.347). The k−corrections that we apply rely on the assumption that the spectra of our SLSN sample are similar to those of PTF 12dam out to late epochs. At late times, the assumption of similarity among the spectra is less certain. We therefore recommend exercising caution in trusting our k-corrections at late epochs.

For the comparison with the Ib/c sample at maximum light, we calculate the k-correction from the observed r to rest-frame r using the spectrum at the peak of PTF 10tqv and following Hogg et al. (2002). We then derive the rest-frame g by applying a color correction from the observed mean g − r = 0.36 mag of a large sample of Type Ib/c SNe of Prentice et al. (2016). Where necessary, we convert B − V measurements from Prentice et al. (2016) at V peak to g − r and adopt the weighted average, and otherwise directly use the observed g − r at the g peak. The standard deviation on the g − r distribution is 0.34 mag (0.25 and 0.23 mag for the g − r and B − V distributions). Since g−r evolves significantly for SNe Ib/c (e.g. Taddia et al. 2015; Prentice et al. 2016), the r to g conversion used here for SNe Ib/c is most reliable around SNe peaks.

4. CHARACTERIZING THE LIGHT CURVES The light curves of PTF H-poor SLSNe sometimes show complex features, such as bumps/plateau, double peaks, and a change of the decay rate. Besides, the data are often sparse. We use the following independent diagnostics to characterize different properties of the light curves.

1. SN peak magnitudes – derived with a second-order polynomial fit to the data around the peak (see Sect. 4.1).

2. Early- and late-time decay rates – derived with two independent linear fits to the data at early and late times after peak (see Sect. 4.2).

3. Rise and fall times by 1 mag, t^{Δ1mag}_{rise} and t^{Δ1mag}_{fall} – the times that the SN takes to rise and fall by 1 mag from the peak (see Sect. 4.4), measured on light curves which have been smoothed using interpolation (see Sect. 4.3).

4. Half-flux rise and fall times t_{rise,1/2}, t_{fall,1/2} – the times for the SN fluxes to rise from half-flux to peak, and to fall form peak to half-flux (see Sect. 4.5), measured on light curves that have been smoothed using interpolation (see Sect. 4.3).

The derived quantities are listed in Table A1 and the details for each diagnostic are reported below.

4.1. Peak-magnitude distribution We calculate the absolute magnitudes using the distance modulus for a given z (e.g. Hogg 1999). At the z considered here (∼ 0.3), the difference in distance modulus obtained from different cosmology models is negligible compared to the uncertainties in the observed apparent magnitudes. The redshifts of the SLSNe are derived in most cases to three decimal digits (see Table 1). In fact, here we are interested only in the relative luminosity distances between different SNe, and the relative uncertainties are even smaller. The uncertainties on the absolute magnitudes are therefore largely dominated by the uncertainties on the observed apparent magnitudes, and we do not make any attempt to include uncertainties due to the distance estimate.

We determine the peak times and magnitudes by fitting a second-order polynomial to the rest-frame g-band magnitudes around the maximum brightness, typically between −30 and 30 days around the approximate peak, or adjusting this interval to adapt to the data coverage. The fitted curves and the relevant time intervals are shown in Figures B1 to B5.

Figure 3, top panel, shows the peak-magnitude distribution of H-poor SLSNe (solid blue), Type Ic-BL SNe (shaded yellow), and Type Ib, Ic, and Ib/c SNe (solid orange), all from the PTF survey, for a brightness bin of 0.2 mag. Note that only SNe where the peak could be observed and constrained are included in this plot. When calculating the number of SNe for each brightness bin, it is important to consider the observational biases. Although SLSNe are bright enough to be observed at larger distances, many normal SNe could actually be exploding at those distances, but be too faint to be detected (Malmquist bias). To compare the numbers of SNe in a fair way, it is therefore necessary to normalize the numbers to the same comoving volume. We calculate the volumetric correction V_c for each SN as the ratio between the volume probed by the most luminous SLSN in our sample (M_{g,max} = −22.42 mag at peak) and the volume probed by the individual SN, given the limiting magnitude of the PTF survey of m_{lim} = 20.5 mag (Cao et al. 2016), i.e., the maximum luminosity distance at which each SN would have been observed with this

Figure 3. Peak-magnitude distribution of the labelled types of PTF SNe, for rest-frame g absolute magnitudes. The bottom panel shows the peak-magnitude distribution after volumetric correction (i.e. corrected for Malmquist bias).

limiting magnitude. The volumetric correction factor V_c is then expressed as follows:

V_c = V_{max}/V_{max,i} = ( D_{L,max} 1 + z_{max}

)_3 / ( D_{L,max,i} 1 + z_i

)_3 , (1)

where the luminosity distance of the brightest SN in the sample is D_{L,max} = 10^{(((mlim−Mg,max)+5.)/5.)}, and the luminosity distance for each individual SN is D_{L,max,i} = 10^{(((mlim−Mg,i )+5.)/5.)}. Figure 3, bottom panel, shows the peak-magnitude distribution after the volumetric correction. The mean peak magnitude of the SLSN sample is < M_{g,peak} >= −21.14 mag with a standard deviation of 0.75 mag.

4.2. The postpeak early- and late-time decay rates The light curves of H-poor SLSNe can show a change in decay rate (e.g. Inserra et al. 2013). Here we independently characterize the postpeak early- and late-time decay rates of H-poor SLSNe with linear fits to the earlytime and late-time data separately. We study the early decay with a linear fit to the rest-frame g magnitudes in a time interval between the peak and typically 60 days after peak. In some cases, this interval was adjusted to the data coverage, or to avoid changes of slope. The selected time intervals and the resulting linear fits to the data are displayed in Figs. B1 to B5 (solid curves). We define the late-time decay as typically beyond 60 days after peak and characterize the decay rate with a linear fit to the data, in the same way as we did for the early-time decay. The linear fits to the late-time decays are displayed in Figs. B1 to B5 (solid curves, typically beyond 60 days after peak).

Figure 4 shows the distribution of the early-time decay slopes (top panel) and the the late-time decay slopes (bottom panel). SLSNe that were originally classified as sub-type R within the PTF survey are marked separately in this figure and compared to the rest of the sample. The original criterion for being classified as an SLSN-R was either a slow decline or spectral similarity with SN 2007bi, with no quantitative threshold. We do not intend to use these criteria as a meaningful classification, but rather to test this classification scheme, because it is often used in the literature (e.g. Gal-Yam 2012; Inserra et al. 2017).

The decay rate of most SLSNe slows down from early to late times. The decay rates and the times of transition from a faster to a slower decay (the intersections between the early- and late-time linear fits) are reported in Table A1.

4.3. Light-curve smoothing We smooth the SN light curves to be able to further measure the rise and decay times more easily. We model the observed light curves with a nonparametric model, as follows. We first fit a first-order polynomial to the rest-frame g-band flux light curves locally. Then, we consider a fitting interval of 5 days (at phases until 5 days after peak), 10 days (at phases beyond 50 days after peak), and proportional to the phase (0.2 times) otherwise. For the interpolations, we use a Gaussian smoothing kernel that weights the fluxes according to their phase distance to each interpolated point. The smoothing algorithm also uses the uncertainties on the photometry to weight the data points. In order to avoid mathematical artifacts, a few auxiliary points are added to the observations. The light-curve smoothing algorithm is described in more detail in Rubin et al. (2016). In a few cases, to avoid unphysical wiggles in the smoothed light curves for poorly sampled regions, we binned scattered data during small time intervals. Namely, we binned the data for PTF 10aagc between 32 and 44 rest-frame days after peak; PTF 09cwl between 122 and 141; PTF 10vwg between 44 and 62; PTF 11rks at 55, and between 144 and 154; and PTF 12gty between 141 and 158. We adopt the formal error on the smoothed fluxes computed by the smoothing algorithm, and assume a minimum uncertainty of 10% of the flux

Figure 4. Postpeak decay slope distribution at early times (typically below 60 days, top panel) and at late times (typically beyond 60 days, bottom panel). At late times, all observed SLSNe cluster around the^{56}Co to^{56}Fe decay rate of 0.0098 mag day^{−1} (dotted vertical line).

in those cases where the formal errors are smaller.

The light-curve smoothing fits to the data in flux space, including the auxiliary points, are shown in Figs. B6 to B9. The collection of all smoothed light curves, normalized by the peak magnitude, is shown in Fig. 5. Even when normalized to the peak, there is a wide variety of light-curve behaviors among H-poor SLSNe, and the scatter is too large to reduce them to a single template. Remarkably, there is no clear gap between fastand slow-decaying SLSNe.

4.4. Times to rise and decay by 1 mag from the peak We derive the times to rise (and decay) by 1 mag to (from) the peak, t^{Δ1mag}_{rise} (t^{Δ1mag}_{fall} ) by inspecting the smooth light curves (Sect. 4.3). Figures B11 to B14 display the time intervals within 1 mag from the peak. Table A1 lists the resulting rise and decay times. The errors are estimated starting from the errors on the smoothed light curves (Sect. 4.3). We create a pseudorandom normal distribution of the smoothed flux errors around the smoothed light curves, through n Monte Carlo realizations, and we estimate n rise (and decay) times. We finally derive the uncertainties on the rise (decay) times from the standard deviation of the distri-

Table 2. Normalizations and slopes of the linear fits of the correlations between rise times and decay times (Figs. 6 and 7). Note. r and ρ are the Pearson and Spearman correlation coefficients, respectively, and are listed with their respective null probability (pr and pρ). Type A B r pr ρ pρ t^{Δ1mag}

rise = A + B × t

Δ1mag fall

SLSN 12.93 ± 6.55 0.36 ± 0.15 0.69 0.057 0.76 0.028 t_{rise,1/2} = A + B × t_{fall,1/2} SLSN 17.32 ± 6.22 0.21 ± 2.06 0.39 0.270 0.44 0.206

bution of rise (and decay) times and assuming a minimum uncertainty of 2 days. We test for convergence of our results by varying the number of Monte Carlo realizations n between 10, 100, 1000, and 10,000, and eventually use n = 1000.

In Fig. 6 we investigate the cross-correlations between t^{Δ1mag}

fall , t

Δ1mag rise , their sum, and the peak magnitude.

There is a clear correlation between t^{Δ1mag}_{fall} and t^{Δ1mag}_{rise} We fit this correlation linearly, assuming t^{Δ1mag}_{rise} = A+B ×t^{Δ1mag}_{fall} and including the observed uncertainties in both x and y axes, for each SN type. SNe where the data are not sufficient to constrain t^{Δ1mag}_{rise} and t^{Δ1mag}_{fall} are excluded from this fit, as reported in Table A1. The results of this fit are shown in Fig. 6 (dotted curves) and reported in Table 2. We also compute the Pearson and Spearman correlation coefficients, which measure the strength (tightness and monotonicity) of a correlation not taking the observed uncertainty into account, and their null probabilities. These are listed in Table 2.

We also find a trend between the peak magnitudes and t^{Δ1mag}

rise , t

Δ1mag fall , and the peak width.

4.5. Times to rise and decay by half-flux We further characterize the rise and decay times using the method of Prentice et al. (2016), who measured the time required to double or halve the flux with respect to the peak flux of a sample of stripped-envelope SNe (Ib/c). We derive t_{rise,1/2} and t_{fall,1/2}, the time to double and halve the flux, respectively, for the PTF SN sample considered in this paper, using the smoothed flux light curves (Sect. 4.3). The resulting t_{rise,1/2} and t_{fall,1/2} are reported in Table A1. We calculated the uncertainties in the same way as for the rise and decay times by 1 mag (Sect. 4.4).

Figure 7 shows the comparison of t_{rise,1/2} and t_{fall,1/2} among the different samples and SN types, and compares it with the results of Prentice et al. (2016). We linearly fit the correlations between rise and decay times for each SN type in the same way as for the rise and decay times by 1 mag (Sect. 4.4). The results of the fit are

Figure 5. Rest-frame g-band smoothed light curves of the SLSNe in our sample, normalized at peak. PTF 10nmn is normalized with respect to the peak magnitude, which is taken from Yaron et al. (2018, in preparation) and is not presented in this paper. The peak magnitudes are derived with a second-order polynomial fit to the data (Figs. B1 to B5) and reported in Table A1.

shown in Fig. 7 (dotted curves) and reported in Table 2.

5. DISCUSSION In this paper, we study 26 hydrogen-poor SLSNe at ”low” redshift (< z >= 0.27), all spectroscopically classified as an SLSN-I and discovered by the (i)PTF survey. Here we characterize their light curves and discuss their (dis)similarity to SNe Ib/c and Ic-BL.

5.1. Peak-magnitude distribution Figure 3, top panel, shows the distribution of the rest-frame g-band absolute peak magnitudes of SLSNe, SNe Ib/c, and Ic-BL. These SNe are all discovered by the PTF survey and separated into these three classes through spectroscopic classification (Quimby et al. 2018; Schulze et al. 2018). The kcorrection has been applied as described in Sect. 3.12.

Clearly, not all peak magnitudes of SLSNe are brighter than < −21 mag. This threshold was an operational definition that was used to start characterizing SLSNe in the early days of their discovery (Quimby et al. 2011; Gal-Yam 2012). In fact, spectroscopically classified SLSNe-I from PTF span a wider range in absolute peak magnitudes, −22.5 ≲ M_{g,peak} ≲ −20 mag. The mean absolute peak magnitude in the PTF sample is < M_{g,peak} > = −21.14 mag, with a standard deviation of 0.75 mag, which is about 2 and 4 mag brighter than the mean for SNe Ic-BL and SN Ib/c in our sample, respectively. The SLSN mean peak magnitude in the PTF sample is similar to what Lunnan et al. (2018) found for the higher-z sample from PS1, and thus we confirm no evidence for evolution of the SLSN peak luminosities with z on the currently available data.

Furthermore, the peak magnitudes of SLSNe-I are all brighter than SNe Ib/c. The gap between the brightest

Figure 6. Times to rise and decay by 1 mag to and from the peak, and peak magnitudes (rest-frame g). The dotted curves show linear fits to the data in our sample.

Figure 7. Times to rise and decay by half-flux. The dotted curves show the linear fit to the data in our sample.

SN Ibc and the faintest SLSN-I is of about 0.5 mag, although somewhat uncertain given the limited size of the samples and the uncertainty on the host-galaxy extinction for the SNe Ib/c. SNe Ic-BL are typically brighter than SNe Ib/c and fill this gap. The distribution of peak magnitudes is continuous from SNe Ib/c to SNe Ic-BL and SLSNe. There is very little overlap between the SLSN population and SNe Ic-BL.

It is crucial to take into consideration the fact that fainter SNe can be observed and counted only out to smaller distances. When applying the volumetric correction to compensate for this bias (Fig. 3, bottom panel), the peak magnitude distribution decays smoothly and exponentially from SNe Ib/c to Ic-BL and to SLSNe. Another important bias to keep in mind is spectroscopic completeness. Because SNe Ib/c exist in the same parameter space as Type Ia or IIp SNe, some of them may be not selected for spectroscopic classification and therefore missing from those that we sample.

We conclude that the peak magnitudes of SLSNe are brighter than those of SNe Ib/c and Ic-BL. However, there is no evidence for SLSNe being drawn from a separate population when considering only the peakmagnitude distribution and taking the volumetric correction into consideration. Further evidence for the difference between SLSNe and SNe Ib/c comes from the rise and decay timescales, which we discuss in Sect. 5.4.

5.2. Observed colors Figure 8 shows the evolution of the observed g−r color for individual SLSNe. The g − r color seems to increase at early epochs, until a few tens of days after peak. The mean observed < g − r > at peak is 0.24 mag, with a standard deviation of 0.37 mag. At later times, the g −r color evolution seems to stabilize at around ∼ 0.5 mag, and perhaps higher.

This g −r evolution in SLSNe is overall similar to that in SN Ib/c (see Figures 22–25 of Prentice et al. 2016). The g − r color in SLSNe may, however, rise for a longer time (up to ∼ 50 days after peak, while SNe Ib/c reach a plateau at 10–20 days after peak), and to lower g−r (the color plateau in SNe Ib/c spans roughly between 0.5–1 mag). However, we caution against a direct comparison of the observed g − r between nearby SNe and SLSN, given their higher redshift. Indeed, after k-correction, the rest-frame g−r colors at peak in SLSNe span roughly between −0.6 and 0.0 mag. The observed-frame colors are reported here only as an observational reference. In Sect. 5.9 we further discuss rest-frame g − r colors at peak in SLSNe.

5.3. Decay rates Figure 4 shows the postpeak decay rates at early times (top panel, typically before 60 days after peak) and late times (bottom panel, typically beyond 60 days after peak), as derived in Sect. 4.2. The two distributions are quite different, indicating that at early times, SLSNe decay faster than at late times. The mean SLSN decay rates are 0.04 and 0.013 mag day^{−1} at early and late times, respectively, with standard deviations of 0.02 and 0.005 mag day^{−1}. All SLSNe with available data in our sample slow down their decay rate from early to late times. Moreover, their late-time decay rate settles around ∼ 1 mag decay per 100 days. This rate is similar to the radioactive decay of^{56}Co to stable^{56}Fe (more specifically, 102.3 days mag^{−1}; Wheeler & Benetti 2000; Nadyozhin 1994). While at late times all SLSNe-I with available data show this slow decay, some selection biases may be present, because fast decays at late times may fall below the detection thresholds and not be measurable.

The late-time decays expected within the magnetar scenario can, under certain circumstances, mimic the radioactive^{56}Co decay (e.g. Moriya et al. 2017). We further discuss this in Sect. 5.8.

The SLSN PTF 12hni is excluded from the late-time decay distribution because it exhibits a clear rebrightening (in all covered filters) and thus a negative decay rate, starting at about 75 days after peak, as reported in Table A1. This could represent a case where interaction with the CSM re-energizes the light curve at late times, through the transformation of kinetic energy into luminosity. This typically requires a high optical depth, and one may naively not expect to observe broad lines and absorption features in this case (see, however, Moriya & Tominaga 2012). The rebrightening of PTF 12hni was not covered by spectral observations (Quimby et al. 2018).

In Fig. 4, we distinguish between classical H-poor SLSNe and those SNe originally classified as SLSNe-R within the PTF survey due to their slow decay early after the peak (consistent with radioactive decay, or spectrally similar to SN 2007bi). We stress again that we do not intend to use these criteria as a meaningful classification, but rather to test this classification scheme. At late times, the decay rates of SLSNe-R indeed cluster around the radioactive nickel decay rate, which is expected given the way SLSNe-R were originally selected. However, at early times, a couple of SLSNe-R have steeper decay slopes. Moreover, there is no evidence for a bimodal distribution in the decay properties in Fig. 5, where all smoothed light curves are plotted together, after being normalized around the peak. Therefore, there is no clear separation between SLSNe-R and classical SLSNe-I. This casts doubt on the existence of SLSN-R as a separate class, as initially suggested by Gal-Yam (2012).

Nevertheless, we note that early-time light-curve features are more common in SLSNe-R than in classical SLSNe-I. While none of the classical SLSNe-I show these features, three out of five SLSNe-R with earlytime coverage (10nmn, Yaron et al. 2018 in preparation; 12dam and 13dcc, Vreeswijk et al. 2017) and possibly a fourth case (13ehe, Yan et al. 2015) have an early plateau or bumps of different strengths. At late times, the light-curve decay in SLSNe-R shows wiggles and bumps in virtually all events. Similar conclusions have also been drawn by Nicholl & Smartt (2016) and Inserra et al. (2017). In the case of the hybrid SLSN iPTF 15esb (late-time emergence of H emission), Liu et al. (2017) showed that the double peak of the light curves could be explained with a multiple-shell CSM interaction model. On the other hand, classical SLSNe-I might show fewer late-time features, the only clear example being PTF 12hni and perhaps PTF 12gty, which are the least luminous among our sample. However, the paucity of late-time data for such events prevents us from drawing firm conclusions. For this reason, we keep open the possibility that two separate subclasses of SLSNe-I exist (slowly/rapidly declining), until further evidence is collected. The light curves of all potential SLSNe-R from PTF are shown together in

Figure 8. Observed g − r color of the SLSNe in our sample. The symbols and colors are as in Fig. 1.

Fig. 9. The presence of bumps in the light curves indicate that either CSM interaction or multiple sources are responsible for powering the light curve, as also found by Vreeswijk et al. (2017) and Inserra et al. (2017).

5.4. Rise and decay times In Fig. 6, we compare the rise and decay timescales (t^{Δ1mag}

rise and t

Δ1mag fall ; Sect. 4.4) and peak magnitudes for

PTF SLSNe-I and PTF SNe Type Ib/c and Ic-BL SNe.

The peak magnitudes are brighter for SLSNe-I than for SNe Ib/c and Ic-BL, as discussed in Sect. 5.1. We find possible mild trends between M_g and t^{Δ1mag}_{rise} and between M_g and t^{Δ1mag}_{fall} , albeit with a very large scatter, and mostly when all SNe are considered. Indeed, neither luminous and fast-evolving events nor faint and slow-evolving ones are observed. A correlation between peak luminosity and rise time was observed for SNe IIn by Ofek et al. (2014a) and is consistent with the explanation of CSM interaction. The predictions for this correlation are in Ofek et al. (2014b).

The SLSNe in our sample tend to have longer rise timescales than SNe Ib/c; see below. Most SNe Ib/c and Ic-BL also tend to decay faster than SLSNe, although there are a few exceptions of slow-decaying, long-lived SNe Ib/c (e.g., PTF 11bov, also known as SN 2011bm; Valenti et al. 2012).

We find a correlation between t^{Δ1mag}_{rise} and t^{Δ1mag}_{fall} for SLSNe (Fig. 6, top left panel). The parameters and strength of this correlation are reported in Table 2. Such a correlation is expected for both magnetar and nickel decay models (e.g. Nicholl et al. 2015a). This correlation is continuous and does not show two separate classes of SLSNe-I, in contrast to the findings of Nicholl et al. (2015a). Interestingly, SLSNe and ”normal” SNe Ibc follow separate t^{Δ1mag}_{rise} – t^{Δ1mag}_{fall} correlations. Although the correlation is not strong, there is an evident offset toward longer rise times for SLSNe with respect to SNe Ib/c. The offset is roughly a 10 day longer rise timescale for SLSNe. Finally, this correlation has a large scatter, and moreover, in some cases (PTF 11dij and PTF 11rks), the measured rise and decay times are similar to those of SNe Ib/c. Therefore, the above-mentioned correlation cannot be used to distinguish between SLSNe-I and SNe Ib/c, but only as an indicator of the average properties of the two populations.

As a sanity check, we further study the rise and decay times with a different approach, by considering the time to rise and decay by half-flux from the peak (t_{rise,1/2} and t_{fall,1/2}, Sect. 4.5). Again, the rise and decay times correlate continuously for SLSNe-I and the correlations are different for the three different classes of SNe. (The parameters and strength of this correlation are reported in Table 2.)

The difference between the correlations of the rise with the decay timescales for SLSNe and SNe Ib/c (and Ic- BL) is evident using both independent methods (Δ1 mag and half-flux). This suggests that SLSNe have longer rise timescales than SNe Ib/c, even for similar decay timescales. Observationally, we conclude that SLSNe show overall different light-curve properties from SNe Ib/c and Ic-BL. Therefore, SLSNe can be considered as a separate population, not only from a spectroscopic (Quimby et al. 2018) but also from a photometric perspective.

5.5. Bolometric correction We use the spectral information derived from a wellobserved event to estimate the bolometric luminosity L_{bol} from single-band photometry. We adopt the conversion from the rest-frame g-band to the bolometric luminosity derived for PTF 12dam by Vreeswijk et al.

Figure 9. Rest-frame M_g light curves of the SLSNe originally classified as SLSNe of the R type.

(2017) up to 334 rest-frame days after peak. The bolometric light curve of PTF 12dam was constructed from the observed spectral series and blackbody models of the UV/optical data. More details on this derivation are explained in Vreeswijk et al. (2017). We apply the bolometric correction from absolute magnitudes to the bolometric luminosity of PTF 12dam to all SLSNe in our sample, i.e. by basically adding a constant to the rest-frame g-band absolute magnitudes, where this constant evolves with the SN phase. This is valid under the assumption of spectral similarity among SLSNe-I. While there are strong indications for such similarity in our sample (Quimby et al. 2018), this is not always guaranteed, especially at late times when the spectral coverage is typically poorer than around peak. A solid case-by-case bolometric correction can in principle only be attempted for the few best observed cases with sufficient spectral coverage. Due to the paucity of such complete datasets, this cannot be done for the full sample and is beyond the scope of the current paper. Nevertheless, given the overall similarity among the spectra in our sample, it is still informative, as a first approximation for the study of the energetics, to use a simple bolometric correction to derive the bolometric luminosities. Because the relative shapes of the light curves does not change between different SLSNe in bolometric luminosity, we do not show the individual light curves. We report the bolometric luminosities at peak in Table 3. The total radiated energy is then derived by integrating the bolometric light curves. Because the bolometric light curves are defined over a limited time interval, the derived radiated energies are lower limits.

5.6. Ni masses We investigate whether the peaks and light curve decays of SLSNe-I could be powered by Ni decay, using two independent methods. First, we derive a very rough estimate of what the required nickel masses would be if the SN peaks were completely powered by nickel. We use the relation L_{peak} = αE_{Ni} = ( 6.45 × 10^{43}e^{−(tpeak /τNi)} + 1.43 × 10^{43}e^{−(tpeak/τCo)} ) × M_{Ni}/M_⊙ (Nadyozhin 1994; Stritzinger & Leibundgut 2005), where τ_{Ni} = 8.8 days and τ_{Co} = 111.3 days, and assume no deviation from the Arnett rule (α = 1, Arnett 1979). The time of explosion is quite uncertain in our sample, because the rise times are often not wellcovered.^8 Thus, we use a representative t_{peak} = 70 days. For a few SLSNe-I that show indications for a longer rise time, we assume an explosion time of 100 days before peak (namely for PTF 10nmn, PTF 11hrq, and PTF 13dcc), and we assume the literature explosion time of 66 days before the peak for PTF 12dam (Vreeswijk et al. 2017). The uncertainties in this Ni mass calculation are of about 20% for an uncertainty in explosion date of about 30%. The Ni mass that we derive with this method for PTF 12dam is similar to what has been derived by Vreeswijk et al. (2017) with a more detailed Ni decay model of the full light curve. In this exercise, the main assumption is that the light

8 In most cases, the SN empirical-model fit of Bazin et al. (2011) does not provide satisfactory results.

curves are totally powered by radioactive Ni decay, while in fact there may be a significant contribution from CSM interaction, magnetars, or other sources. The derived nickel masses are therefore upper limits of the true values, for a peak time of 70 days after explosion. The results are reported in Table 3.

Second, we derive what the required nickel masses would roughly be if the SN late-time decay would be completely powered by nickel. In this case, we compare the SLSN decay, if sufficient photometry is available, to the decay of SN 1987A. For this SN, the wellstudied decay is thought to be powered by the radioactive decay of 0.07 M_⊙ of^{56}Ni (Fransson & Kozma 2002; Seitenzahl et al. 2014). To compare the SLSNe light curves with SN 1987A, we assume an explosion date for the SLSNe and shift the bolometric light curves to that of SN 1987A (taken from Pun et al. 1995), using the same method as Gal-Yam et al. (2009). We shifted the light curve of SN 1987A to match the potential transition from the diffusive phase to the radioactive decay in the SLSN light curves or to the late-time decay. The explosion dates are quite uncertain. We assume the same explosion dates as discussed above. While the assumption on the explosion dates are not secure, here we are only interested in a zero-order estimate of the Ni masses from the tails. Figure 10 shows the comparison between the SLSN light curves and SN 1987A. The Ni masses derived from the light-curve decay are labeled on the figure and reported in Table 3. These masses are upper limits, because they are calculated assuming that the late-time light curves are powered only by radioactive Ni, with no other contribution. The typical uncertainties on these nickel masses are large, roughly of the order of 50% (accounting for a shift in explosion date of up to 100 days). Despite the large uncertainties, these estimates are useful for the comparison with the nickel masses derived from the peaks.

In Table 3, we compare the nickel masses that we derived above with the two methods, one based purely on the peak luminosity and one based purely on the late-time decay. It is evident that the nickel masses derived from the peak luminosities are much higher than the nickel masses derived from the SN decay, both for fast- and slow-evolving SLSNe-I. This suggests that the SLSN peaks are not powered by nickel. This confirms the results of Inserra et al. (2013). In addition, the large ejecta masses required for powering the SLSN-I peaks with Ni radioactivity would increase the diffusion times, and therefore the light curves would show broader peaks than what is observed. A different component, such as magnetar spin-down or CSM interaction, is likely causing the high peak luminosities of most SLSNe-I. A factor of 5 discrepancy between the Ni masses required for the peak and the late-time decay was also found for

SN 1998bw, which was possible to reconcile only with asymmetry of the ejecta (Dessart et al. 2017). Strong evidence for asphericity of this event, based on the spectra, was found by Mazzali et al. (2001), Maeda et al. (2002), and Maeda et al. (2006). If asymmetry is relevant for SLSNe-I as well, the discrepancy between the nickel masses derived from the peak and the late-time decay may be partly mitigated (perhaps by a factor of 5 for asymmetries levels similar to SN 1998bw).

When data coverage is available, we observe a latetime decay of SLSNe-I, which is close to the radioactive decay of^{56}Co to stable^{56}Fe, as observed from the latetime decay slopes (Sect. 4.2). The nickel masses derived from this late-time decay are between ≤ 1 and ≤ 10 M_⊙. This suggests that while nickel production is not the main source powering the light curve peaks, a nickel component could be important, and perhaps dominant, at late times. While the derived Ni masses are upper limits, producing up to 10 M_⊙ of Ni is challenging in classical SN models. The PISN model can produce 1– 10 M_⊙ of nickel from progenitor stars with cores of 90– 105 M_⊙ (Heger & Woosley 2002).

In the case of PTF 10hgi, the only data point at late times seems fainter than what would be predicted from the decay rate of^{56}Co (Fig. 10). The current^{56}Ni mass estimated from the light-curve decay is M_{Ni} ∼ 2 M_⊙. However, estimating the Ni mass directly by scaling the SN 1987A light curve to the fainter data point at late times would provide M_{Ni} ∼ 0.2 M_⊙.

5.7. Radioactive decay One potential power source of SLSN-I light curves is radioactive decay of^{56}Co to stable^{56}Fe (e.g. Gal-Yam et al. 2009). The half-life time of the^{56}Co decay is 77.2 days (Junde et al. 2011). As we discussed above, it is rather unlikely that the SLSN peaks are powered by radioactive decay because of the discrepancy between the Ni masses required by the peak luminosities and those required by the late-time decays. One possibility is that the late-time light curves are powered by radioactive decay. Indeed, we showed in Sect. 4.2 that whenever observable, the SLSN-I light curves tend to slow down, and at late times settle around the 0.01 mag days^{−1} decay rate, which is typical of radioactive^{56}Co decay with full trapping. On the other hand, Inserra et al. (2017) argued that SLSNe tend to decay faster than the radioactive rate, and therefore could not easily be associated with^{56}Co decay. However, the escape of γ-rays can increase the decay rate. In this section, we investigate under which conditions γ-ray escape can efficiently induce a light-curve decline that is faster than the nominal radioactive decay rate.

The radioactive decay energy (RDE) deposition is the heating/excitation/ionization of the SN ejecta because

18 De Cia et al.

Figure 10. Bolometric light curve of SN 1987A (solid curve) is scaled (dashed curves) to match the decay of SLSNe-I (black diamonds) at late times, after bolometric correction. The MNi roughly estimated from this comparison are labeled. The time reference is in rest-frame days after explosion.

PTF SLSN-I light curves 19

Figure 11. Simulated light curves using RDE deposition (black diamonds) for stars with different initial parameters (black labels). A comparison with the SN 1987A light curve, scaled up to match the simulated magnitudes at 150 days, and the associated Ni masses are shown (purple label and dotted curve). Time is measured in rest-frame days after explosion.

Table 3. Radiated energy and nickel mass estimates from the peak luminosity and the late-time decay.

PTF ID log L_{bol,peak} log E_{rad} M_{Ni,peak} M_{Ni,decay} (erg s^{−1}) (erg) [M⊙] [M⊙] 09as 43.4 ≥ 49.3 ≤ 3.4 – 09atu 44.3 ≥ 51.2 ≤ 28.3 – 09cnd 44.5 ≥ 51.3 ≤ 37.3 ≤ 5.5 09cwl 44.4 ≥ 51.2 ≤ 33.7 ≤ 5.5 10aagc 43.7 ≥ 50.0 ≤ 6.5 – 10bfz 44.0 ≥ 50.4 ≤ 12.1 – 10bjp 43.8 ≥ 50.5 ≤ 8.8 – 10cwr 44.3 ≥ 50.8 ≤ 23.5 ≤ 1.0 10hgi 43.7 ≥ 50.5 ≤ 7.2 ≤ 1.7 10nmn 43.7 ≥ 50.6 ≤ 8.3 ≤ 4.5 10uhf 43.9 ≥ 50.3 ≤ 9.8 – 10vqv 44.2 ≥ 50.8 ≤ 21.4 ≤ 6.0 10vwg 44.4 ≥ 51.2 ≤ 32.0 ≤ 5.0 11dij 44.2 ≥ 50.8 ≤ 21.0 ≤ 0.9 11hrq 43.6 ≥ 50.2 ≤ 6.2 ≤ 3.1 11rks 43.9 ≥ 50.6 ≤ 10.7 ≤ 2.7 12dam 44.3 ≥ 51.2 ≤ 24.6 ≤ 9.7 12gty 43.7 ≥ 50.5 ≤ 5.9 ≤ 2.4 12hni 43.6 ≥ 50.1 ≤ 4.8 ≤ 0.8 12mxx 44.2 ≥ 50.8 ≤ 22.6 – 13ajg 44.6 ≥ 51.2 ≤ 49.5 ≤ 5.4 13bdl 43.9 ≥ 50.6 ≤ 9.6 – 13bjz 44.0 ≥ 50.0 ≤ 12.1 – 13cjq 44.1 ≥ 50.7 ≤ 15.2 ≤ 3.4 13dcc 44.5 ≥ 51.3 ≤ 48.6 ≤ 5.0 13ehe 44.2 ≥ 51.2 ≤ 18.3 ≤ 6.5

of radioactive emission of γ-rays (and e^+) and the subsequent acceleration of electrons through Compton scattering (Jeffery 1999). This phenomenon is important for SNe Ia as well as for core-collapse SNe. After a diffusion phase when the γ-rays are fully trapped, a transition to a quasi-steady state marks the beginning of a regime where the decay is dominated by RDE deposition (and the diffusion timescale is much larger than the dynamical and radioactive timescales). At the transition point, the SN luminosity is purely determined by the total amount of radioactive material. The quasisteady state decay is then exponential, starting with a radioactive slope that corresponds to full trapping. In time, the γ-rays can start to escape, and the decay can appear faster. We investigate here whether γ-ray escape is important for massive star progenitors.

We simulate the quasi-steady state decay from pure RDE deposition for stars with a density profile that has an inner plateau and decays exponentially (similar to the ’s25e12’ profile of Dessart & Hillier 2011), where the 56Ni mass is distributed in the inner ejecta. We consider total ejecta masses between 25 and 100 M_⊙,^{56}Ni masses between 5 and 20 M_⊙, and maximum expansion velocity between 10,000 and 20,000 km s^{−1}. The total ejecta mass and maximum expansion velocity determine the absolute value of the density profile at each point. These simulations cannot treat the diffusive phase, but only the light-curve decay beyond maximum light and beyond the transition to the quasi-steady state. As a sanity check, we reproduce the observed radioactive light-curve phase of SN 1987A given an expansion velocity of 6000 km s^{−1}, the same density profile as we used for SLSNe, total ejecta mass of 10 M_⊙, and M(^{56}Ni) = 0.07 M_⊙.

Figure 11 shows the resulting light curves of our RDE deposition simulations for different initial parameters. In all cases, we observe ∼100% gamma-ray trapping at ∼150 days after the explosion. At later times the luminosity can decrease more rapidly because of the reduced trapping due to lower densities. This effect is stronger for high expansion velocities and high M_{Ni}/M_{ej} ejected masses. Within this set of simulations, the deviation from a pure radioactive^{56}Co decay ranges from 0.01 (still fully trapped) to a maximum of 0.27 mag (∼ 50% escape fraction) at about 450 days after explosion, with a decay rate of 1.33 mag in 100 days.

The contours in Figure 12 show the energy deposition fraction (where 100% means full trapping) from our RDE deposition simulations for the cases of 5 and 10 M_⊙ of nickel. These results confirm that massive star progenitors, with high SN ejecta velocities and high Ni fraction in the ejecta, have limited trapping and therefore can decay faster than the radioactive exponential decline. Figure 12 can also be used to roughly estimate the total ejecta masses in case the expansion velocity and the trapping are known from the spectra and light curves, respectively.

An additional factor that can efficiently limit the trapping (and induce faster decays) is the potential mixing of^{56}Ni in the outer layers. While this can be a dominant effect, we do not attempt to model it here, because this is highly dependent on the geometry of the mixing, which cannot be constrained.

5.8. Magnetar modeling We investigate whether the SLSN-I light curves could be powered by the spin-down of a magnetar. We consider an analytic magnetar model sourced from Arnett (1982) and Kasen & Bildsten (2010). The fitting technique is described in detail in Rubin et al. (2018, in preparation). The main model parameters are the initial pulsar spin P , the magnetic field B, the diffusion timescale t_m ≊ M^{3/4}_{ej} E^{1/4}_k (where M_{ej} and E_k are the

Figure 12. Contours show the energy deposition fraction (100% means full trapping) for different ejecta velocities and total ejecta masses, and in the cases of 5 and 10 M⊙ of nickel (left and right panels, respectively). The color scale displays an interpolation of the contours.

ejected mass and kinetic energy, respectively), and the explosion time t_{exp}. This is a basic modeling, that includes neither photon escape nor multiple components. The uncertainties are derived with a Monte Carlo treatment and shown in Figs. B18 to B31. The treatment of the opacity is the same as in Inserra et al. (2013).

Figures B16 and B17 show a fit of the magnetar model described above to the bolometric SLSN-I light curves. The best-fit parameters are reported in Table 4, and displayed in Fig. 13. In most cases, we obtain a satisfactory overall description of the light curves, with the exception of PTF 10hgi, PTF 10vwg, and PTF 11rks, for which we observe a different decay than predicted from our magnetar fit. In addition, the magnetar model does not describe well the light curve of PTF 11dij, both for the late-time decay and the early rise.^9 The confidence levels of the best-fit parameters are shown in Figs. B18 to B31.

Recently, Nicholl et al. (2017) has modeled a large literature SLSN-I sample with a magnetar model, including several published (i)PTF objects. The spin values P that we obtain are mostly consistent with the values of Nicholl et al. (2017). For PTF 12dam, we find a spin value P = 1.87^{+0.07}_{−0.08} ms, which is a bit lower than

9 Forcing the explosion date to be before −28 days improves the fit at late times, but cannot well explain the data around peak and at ∼ 50 days after peak.

Figure 13. Magnetic field strength and magnetar initial spin, as listed in Table 4.

the ∼ 2.3 ms values that were derived by Nicholl et al. (2017) and Vreeswijk et al. (2017), and also lower than that by Chen et al. (2015). The magnetic fields B that we obtain are in all cases higher than what was derived by Nicholl et al. (2017). For PTF 13ajg, our B value is more similar to that found by Vreeswijk et al. (2014). For PTF 12dam, our B value is more similar to those found by Chen et al. (2015) and Vreeswijk et al. (2017).

The late-time luminosities expected from the spindown of a magnetar decline as t^{−2} (e.g. Woosley 2010). In principle, such model may also be able to mimic the 56Co decay of about 1 mag per 100 days, which we observe in SLSN-I late-time light curves. In the case of pure dipole radiation, the magnetar light curves start to have the same decay rate around 200 days postpeak. At later times, e.g. 400 days postpeak, the magnetar model is expected to have a decay rate that is noticeably slower than from the 1 mag/100 days (e.g. Inserra et al. 2013). However, the capability of a magnetar to mimic a radioactive decay would require a pure dipole radiation and a narrow set of fine-tuned parameters, in particular for the magnetic field and Ni masses (Moriya et al. 2017). In Fig. 14 we display the space parameter where a magnetar (in the dipole case) can mimic the radioactive^{56}Co decay from Moriya et al. (2017), and compare it with the results from our magnetar fit on the SLSN light curves. The reference time intervals are derived from the observed times after peak where the SLSN decay follows the radioactive rate (Fig. 10), and using the explosion times from the magnetar fits to the data (Figs. B16 and B17). The magnetic field B is taken from the magnetar fit, while the Ni masses are taken from scaling the late-time light-curve decays (Sect. 5.6). The SLSNe for which these measurements are available are lying in the parameter space where the magnetar decay mimics the radioactive decay of^{56}Co, with the marginal exception of PTF 11rks, for which a magnetar model does not describe the data well. Given that we do observe radiative-like light-curve decays at late times in SLSNe, it is perhaps not surprising that most of the derived magnetar parameters that we derive fulfill the radiative-mimicking criteria. These results indicate that we cannot disentangle between the magnetar and the radioactive decay models at these epochs, up to 400 days after explosion, but that observations at later times can be extremely powerful in disentangling between the two models.

Intriguingly, a correlation between the magnetar initial spin and the host galaxy metallicity was found by Chen et al. (2017). In Fig. 15 we show these quantities for our SLSN data using the host metallicities derived in Perley et al. (2016, ; PP04 N2 scale) and compare them to the correlation of Chen et al. (2017). We cannot confirm the existence of such a correlation in the PTF sample, or at least we find a large scatter (more than a factor of 10) in the derived spin periods, for a similar metallicity range.

5.9. Cosmology tests Because SLSNe can be observed out to large distances, as far out to z ∼ 4 (Cooke et al. 2012) and likely well beyond with future facilities, the prospects of using SLSNe for cosmological distance determinations is of primary interest. Indeed, Inserra & Smartt (2014) suggested that SLSNe-I may be standardizable, based on i) the narrowness of the peak magnitude distribution, ii) a

Figure 14. Parameter space where a magnetar (in the dipole case) can mimic the radioactive^{56}Co decay (shaded area; Moriya et al. 2017). The horizontal lines mark the epochs when SLSNe are observed to decay consistently with the radioactive decay.

Table 4. Resulting parameter from a magnetar fit to the bolometric light curves. Note. The last column lists the host-galaxy metallicity from Perley et al. (2016).

ID B P τm texp 12 + log[O/H] (10^{14} G) (ms) (days) (days) (PP04 N2) 09cnd 1.56^{+0.12}_{−0.11} 1.30^{+0.16}_{−0.18} 63.0^{+3.2}_{−3.0} −45.0^{+1.0}_{−1.0} 8.22^{+0.09}_{−0.15} 09cwl 2.24^{+0.27}_{−0.20} 1.31^{+0.42}_{−0.39} 57.7^{+6.2}_{−8.1} −37.1^{+4.4}_{−2.2} – 10bjp 2.40^{+0.87}_{−0.55} 4.63^{+0.29}_{−0.84} 38.3^{+8.8}_{−7.0} −46.6^{+3.0}_{−2.6} 8.14^{+0.06}_{−0.10} 10cwr 9.41^{+0.67}_{−0.90} 0.06^{+0.10}_{−0.03} 34.8^{+0.9}_{−1.0} −12.6^{+0.6}_{−0.8} 7.96^{+0.12}_{−0.24} 10hgi 3.64^{+0.13}_{−0.13} 4.82^{+0.21}_{−0.21} 39.0^{+1.9}_{−2.1} −42.0^{+1.1}_{−1.3} 8.27^{+0.05}_{−0.06} 10nmn 1.78^{+0.04}_{−0.04} 0.89^{+0.40}_{−0.22} 48.5^{+2.4}_{−1.9} −104.7^{+0.4}_{−1.0} 8.16^{+0.03}_{−0.04} 10vqv 2.10^{+0.17}_{−0.14} 3.22^{+0.30}_{−0.39} 29.9^{+6.1}_{−4.9} −28.5^{+2.3}_{−2.3} 8.28^{+0.04}_{−0.05} 10vwg 2.60^{+0.55}_{−0.43} 2.72^{+0.43}_{−0.48} 29.1^{+6.5}_{−4.8} −34.1^{+2.8}_{−7.1} – 11dij 5.18^{+0.65}_{−0.46} 0.93^{+0.39}_{−0.41} 39.2^{+1.4}_{−1.3} −27.6^{+0.4}_{−0.8} 7.93^{+0.10}_{−0.20} 11rks 4.15^{+0.51}_{−0.43} 4.40^{+0.28}_{−0.43} 26.7^{+1.7}_{−1.7} −22.8^{+1.1}_{−1.3} 8.14^{+0.13}_{−0.18} 12dam 1.38^{+0.05}_{−0.05} 1.68^{+0.08}_{−0.09} 76.8^{+2.1}_{−2.2} −56.0^{+0.8}_{−0.8} 8.07^{+0.01}_{−0.01} 12gty 2.62^{+0.27}_{−0.25} 5.36^{+0.25}_{−0.32} 54.0^{+4.1}_{−4.2} −58.5^{+2.0}_{−2.3} – 12mxx 1.13^{+0.26}_{−0.19} 2.59^{+0.08}_{−0.16} 44.3^{+5.0}_{−4.2} −48.4^{+2.1}_{−1.9} 8.19^{+0.13}_{−0.19} 13ajg 1.98^{+0.08}_{−0.08} 1.73^{+0.09}_{−0.09} 33.8^{+1.3}_{−1.3} −28.7^{+1.4}_{−0.8} –

weak correlation between the peak magnitude (at restframe 400 nm) and its decay after a certain time, and iii) the dependence of the peak magnitude (at rest-frame 400 nm) on the SLSN-I color (rest-frame 400–520 nm). We test similar correlations in the current sample.

Figure 15. Magnetar spin and host-galaxy metallicity. The red dotted line shows the spin-metallicity correlation found by Chen et al. (2017).

i) We use the rest-frame g band as a proxy for the restframe 400 nm band of Inserra & Smartt (2014). The peak magnitudes of the SLSNe in our sample are widely distributed around their mean value (< M_g >= −21.14 mag), with a standard deviation of 0.75 mag, which is almost twice as in the sample of Inserra & Smartt (2014).

ii) Figure 16 shows the distribution of the rest-frame g peak magnitude, M_{g,peak}, with its decay, ΔM_g, at 10, 20, and 30 days after the peak. These were all calculated from the smoothed light curves (Sect. 4.3) and can therefore be slightly different from the M_{g,peak} calculated with the second-order polynomial around the peak (Sect. 4.1). As a comparison, SLSNe-I and also Type Ic and Ic-BL SNe from PTF are shown in Fig. 16. There are very weak correlations, highlighted by the linear fits to the data. However, none of these trends are significant correlations. In every case, the Pearson correlation coefficient is | r |< 0.3, and the intrinsic scatter is up to ∼ 0.8 mag for SLSNe-I; see Fig. 16. The intrinsic scatter of the correlation is the scatter required for the correlation to have χ^2 ∼ 1 (Bedregal et al. 2006; Williams et al. 2010), and it is a way of discriminating the observational scatter from what is intrinsic to the correlation. The data and fit results for SLSNe-I are reported in Tables 5 and 6, respectively.

iii) In Fig. 17 and Table 7, we compare the rest-frame g peak magnitude with the rest-frame g − r color at peak. The rest-frame r was derived from the observed iband photometry using the same techniques as described

Table 5. Rest-frame g magnitude at peak and its decay from the peak after 10, 20, and 30 days, calculated from the smoothed light curves (Sect. 4.3).

PTF ID M_{g,peak} ΔMg10 ΔMg20 ΔMg30 09atu −21.8 ± 0.1 0.1 ± 0.1 0.2 ± 0.2 0.3 ± 0.2 09cnd −22.1 ± 0.1 0.1 ± 0.1 0.3 ± 0.1 0.4 ± 0.1 09cwl −22.0 ± 0.1 0.1 ± 0.1 0.2 ± 0.1 0.3 ± 0.2 10aagc −20.1 ± 0.1 0.7 ± 0.5 1.2 ± 0.5 2.0 ± 0.6 10cwr −21.6 ± 0.1 0.2 ± 0.1 0.7 ± 0.1 1.2 ± 0.1 10hgi −20.3 ± 0.1 0.1 ± 0.1 0.4 ± 0.1 1.1 ± 0.2 10vqv −21.5 ± 0.1 0.2 ± 0.2 0.5 ± 0.2 0.8 ± 0.2 10vwg −21.9 ± 0.1 0.2 ± 0.1 0.5 ± 0.2 1.0 ± 0.3 11dij −21.4 ± 0.1 0.0 ± 0.1 0.4 ± 0.1 0.9 ± 0.1 11rks −20.9 ± 0.1 0.2 ± 0.1 0.5 ± 0.1 1.2 ± 0.1 12dam −21.7 ± 0.1 0.3 ± 0.1 0.4 ± 0.1 0.5 ± 0.1 12gty −20.1 ± 0.1 0.3 ± 0.1 0.5 ± 0.1 0.6 ± 0.2 12hni −19.9 ± 0.1 0.1 ± 0.1 0.4 ± 0.1 1.0 ± 0.2 13ajg −22.4 ± 0.1 0.3 ± 0.1 0.8 ± 0.1 1.2 ± 0.1 13cjq −21.1 ± 0.1 0.1 ± 0.2 0.5 ± 0.2 1.3 ± 0.4 13dcc −22.0 ± 0.1 0.4 ± 0.1 0.6 ± 0.1 1.1 ± 0.1 13ehe −21.3 ± 0.1 0.1 ± 0.2 0.1 ± 0.2 0.2 ± 0.2

Table 6. Fit parameters of the M_{g,peak} = A + B × ΔMg relation for SLSNe at different epochs (days after peak, see Fig. 16 and Table 5). Note. σint is the intrinsic scatter (see text). r and ρ are the Pearson and Spearman correlation coefficients, respectively, and are listed with their respective null probability (pr and pρ). t A B σint r pr ρ pρ 10 – – – −0.24 0.37 −0.23 0.39 20 −20.9 ± 0.5 −1.2 ± 1.1 0.75 −0.10 0.71 −0.11 0.69 30 −21.7 ± 0.5 0.4 ± 0.5 0.76 0.14 0.60 0.15 0.57

for the r to rest-frame g conversion. The k-correction values are listed in Table C4. Both the rest-frame gand r-band peaks were estimated by fitting a secondorder polynomial to the data around peak. We could then constrain the rest-frame g − r for a subsample of SLSNe-I, as listed in Table 7.

The correlation M_{g,peak} = A + B × (g − r)_{peak} is weak, with a Pearson correlation coefficient of 0.59 (null probability p_r = 0.04) and a Spearman correlation coefficient of 0.57 (null probability p_ρ = 0.04). The normalization and slope are A = −19.5 ± 1.2 and B = 7.5 ± 3.8. In this case, the intrinsic scatter is consistent with zero. While this may suggest a potentially real correlation, it may simply be the consequence of the large error bars that we measure for g − r. A larger statistical sample is needed to further investigate the solidity of this relation.

Figure 16. Rest-frame g magnitude at peak and its decay from the peak after 10 (left), 20 (middle), and 30 days (right panel). Blue squares show SLSNe-I, gold diamonds show SNe Ic-BL, and orange triangles SNe Ic, all from PTF. The solid and dotted lines show linear fits through the data and the intrinsic scatter, respectively.

Table 7. Rest-frame g and rest-frame g − r magnitudes at peak for the SLSNe in our sample (see Fig. 17).

PTF ID M_{g,peak} g − r(peak) 09atu −21.78 ± 0.04 −0.24 ± 0.15 09cnd −22.09 ± 0.03 −0.37 ± 0.07 10cwr −21.59 ± 0.06 −0.25 ± 0.14 10hgi −20.31 ± 0.02 −0.29 ± 0.16 11dij −21.39 ± 0.19 −0.41 ± 0.19 11rks −20.88 ± 0.13 −0.06 ± 0.19 12dam −21.61 ± 0.05 −0.46 ± 0.15 12gty −19.90 ± 0.15 0.11 ± 0.23 12mxx −21.60 ± 0.08 −0.06 ± 0.16 13ajg −22.42 ± 0.16 −0.34 ± 0.19 13dcc −21.88 ± 0.15 −0.64 ± 0.47 13ehe −21.26 ± 0.20 −0.09 ± 0.22

The possible dust reddening E(B − V ) of the SLSN- I host galaxies is not taken into account here. While this should we expect the reddening to be small (e.g. Perley et al. 2016), there may be regions that are locally more dusty (e.g. Cikota et al. 2017). However, a caseto-case characterization of the host-galaxies’ E(B−V ) is not possible here and is beyond the scope of this paper.

While we find the same overall trends as Inserra & Smartt (2014), the diagnostics above show mostly weaker correlations than reported by their work. One exception is the relation between the peak magnitude and g −r at peak, for which we find a similar Pearson correlation coefficient to Inserra & Smartt (2014).

We further investigate possible correlations of M_g with other variables, such as the early decay slope or host

Figure 17. Rest-frame g peak magnitude versus the restframe g − r color at peak, for PTF SLSNe. The solid line shows a linear fit to the data. The Pearson correlation coefficient is r = 0.6.

metallicity, with no convincing results. The weak trends of M_g with the rise and decay times are shown in Fig. 6. We therefore cannot strengthen the claim that SLSNe might be standardizable candles with the current data. Future transient surveys may clarify this issue with much improved statistics (e.g. Scovacricchi et al. 2016).

6. CONCLUSIONS We study a sample of 26 SLSNe-I, all discovered by the PTF survey with light-curve coverage out to late times, well beyond 100 days after peak for half of the sample. Based on our analysis, we conclude the following.

1. The absolute peak magnitudes of PTF spectroscopically classified SLSNe-I are −22.5 ≲ M_g ≲ −20 mag (Sect. 4.1 and 5.1). The mean SLSN-I peak magnitude is −21.14 mag, which is brighter than the mean magnitudes of SNe Ic-BL and SNe Ib/c by about 2 and 4 mag, respectively. When including volumetric corrections, the peakmagnitude distribution evolves smoothly from SNe Ib/c to SNe Ic-BL, and to SLSNe-I. There is only very little overlap between the faintest SLSNe-I and the brightest SNe Ic-BL.

2. At early times (< 60 days after peak) SLSNe-I tend to decay faster (0.04 mag day^{−1} on average) and with a wider range of decay rates than at late times (> 60 days); see Sect. 4.2 and 5.3.

3. At late times, all SLSN-I light curves for which sufficient data are available cluster around the decay rate of ∼ 1 mag per 100 days, which is consistent with the radioactive decay of^{56}Co to stable^{56}Fe (Sect. 4.2 and 5.3).

4. We observe no gap between fast- and slowdeclining SLSNe-I. Nevertheless, virtually all slowdeclining events (SLSN-R) show early- and latetime bumps/plateau which are not as common in classical SLSNe-I. Thus, the possibility is still open that SLSN-I/R represent a subclass of SLSN- I (Sect. 4.2 and 5.3).

5. SLSNe-I rise more slowly than SNe Ib/c and Ic- BL (i.e. SLSNe have longer rise timescales t^{Δ1mag}_{rise} by roughly 10 days), even for similar decay times. Indeed, the rise times correlate differently with the decay times for SLSNe-I and SNe Ib/c (Sect. 4.4, 4.5, and 5.4).

6. This implies that the light curves of SLSNe-I are different from SNe Ib/c and Ic-BL, and therefore SLSNe-I can be considered as a separate population photometrically, as well as spectroscopically.

7. The peaks of SLSNe-I are not powered by the production of radioactive nickel, unless there are strong asymmetries in the ejecta (Sect. 5.6).

8. Late-time light curves can be explained with the radioactive decay of Ni masses ranging from 1 to 10 M_⊙. Radioactive decay might be an important powering source at these stages (Sect. 5.6).

9. The slope of the late-time decay is in a few SLSNe- I faster than the radioactive decay. This can be explained by the escape of γ-rays from the massive ejecta. Our simulations of the radiative decay energy deposition for massive progenitors shows that the trapping is reduced for higher expansion velocities and higher Ni fractions of the ejected masses (Sect. 5.7).

10. The majority of the SLSN-I light curves can reasonably well be reproduced also with a spinningdown magnetar model, with the exceptions of PTF 10hgi, PTF 10vwg, PTF 11dij, and PTF 11rks (Sect. 5.8). The derived magnetic fields lie in the parameter space where a magnetar model can mimic the radioactive decay of^{56}Co.

11. We cannot distinguish between a radioactively powered and magnetar light curves at this stage. Very late-time observations are needed to disentangle between the magnetar and radioactive models.

12. We find no correlation between the magnetar spin and the host metallicity (Sect. 5.8).

13. We find similar correlations to those claimed to make SLSN-I standardizable candles (Inserra & Smartt 2014); see Sect. 5.9. These correlations are significantly weaker, except for the correlation between the rest-frame g-band peak magnitude with the rest-frame g − r at peak. With the current data, we cannot strengthen the potential of exploiting SLSNe for cosmology.

We thank the referee for a useful and constructive report, which helped make the paper more robust. We thank L. Dessart, A. Jerkstrand, A. Kozyreva, and the SLSN MIAPP 2017 workshop participants for insightful discussions. A.D.C. acknowledges support by the Weizmann Institute of Science Koshland Center for Basic Research. Support for I.A. was provided by NASA through the Einstein Fellowship Program, grant PF6- 170148. M.S. acknowledges support from EU/FP7-ERC grant No. [615929]. K.M. acknowledges support from the STFC through an Ernest Rutherford Fellowship. E.O.O. is grateful for support by grants from the Israel Science Foundation, Minerva, Israeli ministry of Science, the US-Israel Binational Science Foundation and the I-CORE Program of the Planning and Budgeting Committee and The Israel Science Foundation. A.C. acknowledges support from the NSF CAREER award 1455090. M.M.K. acknowledges support from the GROWTH project funded by the National Science Foundation under Grant No. 1545949. The intermediate Palomar Transient Factory project is a scientific collaboration among the California Institute of Technology, Los Alamos National Laboratory, the University of Wisconsin, Milwaukee, the Oskar Klein Center, the Weizmann Institute of Science, the TANGO Program of the University System of Taiwan, and the Kavli Institute for the Physics and Mathematics of the Universe. LANL participation in iPTF is supported by the

26 De Cia et al.

US Department of Energy as a part of the Laboratory Directed Research and Development program. A portion of this work was carried out at the Jet Propulsion Laboratory under a Research and Technology Development Grant, under contract with the National Aeronautics and Space Administration. This research has made use of the NASA/ IPAC Infrared Science Archive, which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the National Aeronautics and Space Administration. This research has made use of NASA’s Astrophysics Data System. This paper made use of Lowell Observatory’s Discovery Channel Telescope (DCT). Lowell operates the DCT in partnership with Boston University, Northern Arizona University, the University of Maryland, and the University of Toledo. Partial support of the DCT was provided by Discovery Communications. Large Monolithic Imager (LMI) on DCT was built by Lowell Observatory using funds from the National Science Foundation (AST-1005313). This work makes use of observations taken with the LCO network. This research has made use of the NASA/IPAC Extragalactic Database (NED) which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the National Aeronautics and Space Administration. Some of the data presented herein were obtained at the W.M. Keck Observatory, which is operated as a scientific partnership among the California Institute of Technology, the University of California and the National Aeronautics and Space Administration. The Observatory was made possible by the generous financial support of the W.M. Keck Foundation. The authors wish to recognize and acknowledge the very significant cultural role and reverence that the summit of Maunakea has always had within the indigenous Hawaiian community. We are most fortunate to have the opportunity to conduct observations from this mountain.

REFERENCES

Abbott, T., Cooke, J., Curtin, C., et al. 2017, PASA, 34, e012 Ahn, C. P., Alexandroff, R., Allende Prieto, C., et al. 2014, ApJS, 211, 17 Arcavi, I., Gal-Yam, A., Kasliwal, M. M., et al. 2010, ApJ, 721, 777 Arnett, W. D. 1979, ApJL, 230, L37 —. 1982, ApJ, 253, 785 Barkat, Z., Rakavy, G., & Sack, N. 1967, Physical Review Letters, 18, 379 Bazin, G., Ruhlmann-Kleider, V., Palanque-Delabrouille, N., et al. 2011, A&A, 534, A43 Bedregal, A. G., Aragón-Salamanca, A., & Merrifield, M. R.

2006, MNRAS, 373, 1125 Bertin, E., Mellier, Y., Radovich, M., et al. 2002, in

Astronomical Society of the Pacific Conference Series, Vol. 281, Astronomical Data Analysis Software and Systems XI, ed. D. A. Bohlender, D. Durand, & T. H. Handley, 228 Bessell, M. S. 1990, PASP, 102, 1181 Breeveld, A. A., Curran, P. A., Hoversten, E. A., et al. 2010, MNRAS, 406, 1687 Brown, T. M., Baliber, N., Bianco, F. B., et al. 2013, PASP, 125, 1031 Cao, Y., Nugent, P. E., & Kasliwal, M. M. 2016, PASP, 128, 114502 Cardelli, J. A., Clayton, G. C., & Mathis, J. S. 1989, ApJ, 345, 245 Cenko, S. B., Fox, D. B., Moon, D.-S., et al. 2006, PASP, 118, 1396 Chatzopoulos, E., Wheeler, J. C., & Vinko, J. 2012, ApJ, 746, 121 Chen, T.-W., Smartt, S. J., Yates, R. M., et al. 2017, MNRAS, 470, 3566 Chen, T.-W., Smartt, S. J., Jerkstrand, A., et al. 2015, MNRAS, 452, 1567 Chevalier, R. A., & Fransson, C. 1994, ApJ, 420, 268 Chevalier, R. A., & Irwin, C. M. 2011, ApJL, 729, L6 Chugai, N. N., & Danziger, I. J. 1994, MNRAS, 268, 173 Cikota, A., De Cia, A., Schulze, S., et al. 2017, MNRAS, 469, 4705

Cooke, J., Sullivan, M., Gal-Yam, A., et al. 2012, Nature, 491, 228 Corsi, A., Gal-Yam, A., Kulkarni, S. R., et al. 2016, ApJ, 830, 42 Curtin, C., Cooke, J., Moriya, T. J., et al. 2018, ArXiv e-prints, arXiv:1801.08241 Dessart, L., & Hillier, D. J. 2011, MNRAS, 410, 1739 Dessart, L., Hillier, D. J., Waldman, R., Livne, E., & Blondin, S.

2012, MNRAS, 426, L76 Dessart, L., Hillier, D. J., Yoon, S.-C., Waldman, R., & Livne, E.

2017, ArXiv e-prints, arXiv:1703.08932 Dimitriadis, G., Sullivan, M., Kerzendorf, W., et al. 2017, MNRAS, 468, 3798 Firth, R. E., Sullivan, M., Gal-Yam, A., et al. 2015, MNRAS, 446, 3895 Fransson, C., & Kozma, C. 2002, NewAR, 46, 487 Fukugita, M., Ichikawa, T., Gunn, J. E., et al. 1996, AJ, 111, 1748 Gal-Yam, A. 2012, Science, 337, 927 Gal-Yam, A., Moon, D.-S., Fox, D. B., et al. 2004, ApJL, 609, L59 Gal-Yam, A., Nakar, E., Ofek, E. O., et al. 2008, ApJ, 686, 408 Gal-Yam, A., Mazzali, P., Ofek, E. O., et al. 2009, Nature, 462, 624 Gal-Yam, A., Kasliwal, M. M., Arcavi, I., et al. 2011, ApJ, 736, 159 Gehrels, N., Chincarini, G., Giommi, P., et al. 2004, ApJ, 611, 1005 Heger, A., & Woosley, S. E. 2002, ApJ, 567, 532 Henden, A. A., Welch, D. L., Terrell, D., & Levine, S. E. 2009, in American Astronomical Society Meeting Abstracts, Vol. 214, American Astronomical Society Meeting Abstracts 214, 407.02 Hogg, D. W. 1999, ArXiv Astrophysics e-prints,

astro-ph/9905116 Hogg, D. W., Baldry, I. K., Blanton, M. R., & Eisenstein, D. J.

2002, ArXiv Astrophysics e-prints, astro-ph/0210394 Hogg, D. W., Blanton, M., Lang, D., Mierle, K., & Roweis, S.

2008, in Astronomical Society of the Pacific Conference Series, Vol. 394, Astronomical Data Analysis Software and Systems XVII, ed. R. W. Argyle, P. S. Bunclark, & J. R. Lewis, 27 Inserra, C., & Smartt, S. J. 2014, ApJ, 796, 87

PTF SLSN-I light curves 27

Inserra, C., Smartt, S. J., Jerkstrand, A., et al. 2013, ApJ, 770, 128 Inserra, C., Nicholl, M., Chen, T.-W., et al. 2017, MNRAS, 468, 4642 Inserra, C., Smartt, S. J., Gall, E. E. E., et al. 2018, MNRAS, 475, 1046 Jeffery, D. J. 1999, ArXiv Astrophysics e-prints,

astro-ph/9907015 Jerkstrand, A., Smartt, S. J., Inserra, C., et al. 2017, ApJ, 835, 13 Jones, D. O., Rodney, S. A., Riess, A. G., et al. 2013, ApJ, 768, 166 Junde, H., Su, H., & Dong, Y. 2011, Nuclear Data Sheets, 112, 1513 Kaiser, N., Burgett, W., Chambers, K., et al. 2010, in Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 7733, Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, 0 Kasen, D., & Bildsten, L. 2010, ApJ, 717, 245 Kozyreva, A., & Blinnikov, S. 2015, MNRAS, 454, 4357 Laher, R. R., Surace, J., Grillmair, C. J., et al. 2014, PASP, 126, 674 Law, N. M., Kulkarni, S. R., Dekany, R. G., et al. 2009, PASP, 121, 1395 Leloudas, G., Chatzopoulos, E., Dilday, B., et al. 2012, A&A, 541, A129 Leloudas, G., Schulze, S., Krühler, T., et al. 2015, MNRAS, 449, 917 Liu, L.-D., Wang, L.-J., Wang, S.-Q., & Dai, Z.-G. 2017, ArXiv e-prints, arXiv:1706.01783 Lunnan, R., Chornock, R., Berger, E., et al. 2015, ApJ, 804, 90 —. 2016, ApJ, 831, 144 —. 2018, ApJ, 852, 81 Maeda, K., Mazzali, P. A., & Nomoto, K. 2006, ApJ, 645, 1331 Maeda, K., Nakamura, T., Nomoto, K., et al. 2002, ApJ, 565, 405 Maguire, K., Sullivan, M., Pan, Y.-C., et al. 2014, MNRAS, 444, 3258 Mazzali, P. A., Nomoto, K., Patat, F., & Maeda, K. 2001, ApJ, 559, 1047 Mazzali, P. A., Sullivan, M., Pian, E., Greiner, J., & Kann, D. A.

2016, MNRAS, 458, 3455 McCrum, M., Smartt, S. J., Rest, A., et al. 2015, MNRAS, 448, 1206 Moriya, T. J., Chen, T.-W., & Langer, N. 2017, ApJ, 835, 177 Moriya, T. J., & Tominaga, N. 2012, ApJ, 747, 118 Moriya, T. J., Tanaka, M., Yasuda, N., et al. 2018, ArXiv e-prints, arXiv:1801.08240 Nadyozhin, D. K. 1994, ApJS, 92, 527 Nakar, E., & Sari, R. 2010, ApJ, 725, 904 Neill, J. D., Sullivan, M., Gal-Yam, A., et al. 2011, ApJ, 727, 15 Nicholl, M., Guillochon, J., & Berger, E. 2017, ApJ, 850, 55 Nicholl, M., & Smartt, S. J. 2016, MNRAS, 457, L79 Nicholl, M., Smartt, S. J., Jerkstrand, A., et al. 2013, Nature, 502, 346 —. 2015a, ApJL, 807, L18 —. 2015b, MNRAS, 452, 3869 Nicholl, M., Berger, E., Smartt, S. J., et al. 2016, ApJ, 826, 39 O’Donnell, J. E. 1994, ApJ, 422, 158 Ofek, E. O., Cameron, P. B., Kasliwal, M. M., et al. 2007, ApJL, 659, L13 Ofek, E. O., Laher, R., Surace, J., et al. 2012, PASP, 124, 854 Ofek, E. O., Fox, D., Cenko, S. B., et al. 2013, ApJ, 763, 42 Ofek, E. O., Arcavi, I., Tal, D., et al. 2014a, ApJ, 788, 154 Ofek, E. O., Zoglauer, A., Boggs, S. E., et al. 2014b, ApJ, 781, 42 Pastorello, A., Smartt, S. J., Botticella, M. T., et al. 2010, ApJL, 724, L16 Perley, D. A., Quimby, R. M., Yan, L., et al. 2016, ApJ, 830, 13

Piro, A. L. 2015, ApJL, 808, L51 Poole, T. S., Breeveld, A. A., Page, M. J., et al. 2008, MNRAS, 383, 627 Prentice, S. J., Mazzali, P. A., Pian, E., et al. 2016, MNRAS, 458, 2973 Pun, C. S. J., Kirshner, R. P., Sonneborn, G., et al. 1995, ApJS, 99, 223 Quimby, R. M., Aldering, G., Wheeler, J. C., et al. 2007, ApJL, 668, L99 Quimby, R. M., Kulkarni, S. R., Kasliwal, M. M., et al. 2011, Nature, 474, 487 Quimby, R. M., De Cia, A., Gal-Yam, A., et al. 2018, ArXiv e-prints, arXiv:1802.07820 Rabinak, I., & Waxman, E. 2011, ApJ, 728, 63 Rahmer, G., Smith, R., Velur, V., et al. 2008, in Proc. SPIE, Vol. 7014, Ground-based and Airborne Instrumentation for Astronomy II, 70144Y Rau, A., Kulkarni, S. R., Law, N. M., et al. 2009, PASP, 121, 1334 Roming, P. W. A., Kennedy, T. E., Mason, K. O., et al. 2005, SSRv, 120, 95 Rubin, A., Gal-Yam, A., De Cia, A., et al. 2016, ApJ, 820, 33 Schlafly, E. F., & Finkbeiner, D. P. 2011, ApJ, 737, 103 Schulze, S., Krühler, T., Leloudas, G., et al. 2018, MNRAS, 473, 1258 Scovacricchi, D., Nichol, R. C., Bacon, D., Sullivan, M., & Prajs, S. 2016, MNRAS, 456, 1700 SDSS Collaboration, Albareti, F. D., Allende Prieto, C., et al.

2016, ArXiv e-prints, arXiv:1608.02013 Seitenzahl, I. R., Timmes, F. X., & Magkotsios, G. 2014, ApJ, 792, 10 Smith, M., Sullivan, M., D’Andrea, C. B., et al. 2016, ApJL, 818, L8 Smith, N., Li, W., Foley, R. J., et al. 2007, ApJ, 666, 1116 Steele, I. A., Smith, R. J., Rees, P. C., et al. 2004, in Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 5489, Ground-based Telescopes, ed. J. M. Oschmann, Jr., 679–692 Stritzinger, M., & Leibundgut, B. 2005, A&A, 431, 423 Sullivan, M., Howell, D. A., Perrett, K., et al. 2006, AJ, 131, 960 Taddia, F., Sollerman, J., Leloudas, G., et al. 2015, A&A, 574, A60 Taddia, F., Sollerman, J., Fremling, C., et al. 2018a, A&A, 609, A106 Taddia, F., Stritzinger, M. D., Bersten, M., et al. 2018b, A&A, 609, A136 Thöne, C. C., de Ugarte Postigo, A., García-Benito, R., et al.

2015, MNRAS, 451, L65 Thuan, T. X., & Gunn, J. E. 1976, PASP, 88, 543 Valenti, S., Taubenberger, S., Pastorello, A., et al. 2012, ApJL, 749, L28 Valenti, S., Howell, D. A., Stritzinger, M. D., et al. 2016, MNRAS, 459, 3939 van Dokkum, P. G. 2001, PASP, 113, 1420 Vreeswijk, P. M., Savaglio, S., Gal-Yam, A., et al. 2014, ApJ, 797, 24 Vreeswijk, P. M., Leloudas, G., Gal-Yam, A., et al. 2017, ApJ, 835, 58 Wheeler, J. C., & Benetti, S. 2000, Supernovae, ed. A. N. Cox, 451 Williams, M. J., Bureau, M., & Cappellari, M. 2010, MNRAS, 409, 1330 Woosley, S. E. 2010, ApJL, 719, L204 Yan, L., Quimby, R., Ofek, E., et al. 2015, ApJ, 814, 108 Yan, L., Lunnan, R., Perley, D., et al. 2017, ArXiv e-prints, arXiv:1704.05061

28 De Cia et al.

York, D. G., Adelman, J., Anderson, Jr., J. E., et al. 2000, AJ, 120, 1579 Zacharias, N., Monet, D. G., Levine, S. E., et al. 2004, in Bulletin of the American Astronomical Society, Vol. 36, American Astronomical Society Meeting Abstracts, 1418

APPENDIX

A. SLSN-I LIGHT-CURVE PROPERTIES The light-curve properties of the (i)PTF SLSN-I sample that we derived above (i.e. peak magnitude, early- and late-time decay, rise and decay timescales) are reported in Table A1.

Table A1. Light-curve properties of the H-poor SLSN sample

PTF ID MJD_{peak} Mg, peak χ^2_{ν,peak}/ν Slope1^a χ^2_{ν,Slope1}/ν Slope2^a χ^2_{ν,Slope2}/ν Int^b t^{1mag}_{rise} t^{1mag}_{fall} t_{rise,1/2} t_{fall,1/2} (mag) (mag day^{−1}) (mag day^{−1}) (days) (days) (days) (days) (days)

09as 54918.20 (−19.51 ± 0.13) 0.30/8 0.0830 ± 0.0121 0.27/9 – – – – 11 ± 3 – 9 ± 3 09atu 55062.32 −21.78 ± 0.04 0.20/22 0.0137 ± 0.0052 0.27/13 – – – 37 ± 2 70 ± 8 32 ± 3 61 ± 11 09cnd 55086.35 −22.09 ± 0.03 0.17/28 0.0226 ± 0.0018 0.61/8 – – – 33 ± 2 54 ± 6 29 ± 2 45 ± 4 09cwl 55067.25 −22.03 ± 0.13 0.44/3 0.0320 ± 0.0012 0.98/2 – – – 25 ± 2 – 21 ± 2 54 ± 7 10aagc 55499.48 −20.12 ± 0.25 1.69/28 0.0745 ± 0.0042 1.16/26 – – – – 17 ± 9 – 11 ± 5 10bfz 55227.46 (−20.86 ± 0.03) 0.15/5 0.0658 ± 0.0026 0.85/30 – – – – 33 ± 4 – 28 ± 2 10bjp 55252.52 −20.52 ± 0.16 0.41/9 0.0241 ± 0.0154 1.73/4 – – – 42 ± 2 – – – 10cwr 55281.23 −21.59 ± 0.06 0.46/10 0.0675 ± 0.0038 3.76/2 – – – – 28 ± 2 – 23 ± 2 10hgi 55367.43 −20.31 ± 0.02 0.09/22 0.0519 ± 0.0033 0.92/12 0.0211 ± 0.0011 0.93/12 37.7 32 ± 2 28 ± 2 29 ± 2 25 ± 2 10nmn 55384.20 −20.53 ± 0.04 0.02/2 – – 0.0080 ± 0.0003 0.26/16 – – 61 ± 18 – – 10uhf 55452.25 −20.60 ± 0.22 1.50/12 0.0356 ± 0.0072 1.48/6 – – – – – – – 10vqv 55470.52 −21.58 ± 0.11 0.40/14 0.0338 ± 0.0043 0.12/6 0.0186 ± 0.0084 0.27/5 55.6 – 36 ± 5 – 29 ± 5 10vwg 55455.29 −21.94 ± 0.20 2.89/19 0.0451 ± 0.0019 9.48/8 0.0119 ± 0.0029 0.67/5 43.0 39 ± 2 – 33 ± 3 25 ± 4 11dij 55684.37 −21.39 ± 0.19 5.44/22 0.0550 ± 0.0005 4.92/30 0.0141 ± 0.0018 0.26/3 74.5 15 ± 2 31 ± 2 13 ± 2 27 ± 2 11hrq 55753.48 (−19.80 ± 0.04) 0.32/23 0.0156 ± 0.0006 0.45/45 0.0163 ± 0.0006 1.25/58 7.4 – 55 ± 6 – 37 ± 7 11rks 55935.14 −20.88 ± 0.13 1.84/50 0.0501 ± 0.0021 1.62/30 0.0085 ± 0.0072 1.39/2 60.0 17 ± 2 27 ± 2 15 ± 2 24 ± 2 12dam 56092.33 −21.61 ± 0.05 4.72/45 0.0137 ± 0.0002 4.84/17 0.0178 ± 0.0002 5.35/52 113.4 34 ± 2 62 ± 5 29 ± 2 49 ± 6 12gty 56143.36 −19.90 ± 0.15 0.80/20 0.0277 ± 0.0031 2.41/9 0.0115 ± 0.0028 0.88/7 54.9 36 ± 3 41 ± 11 28 ± 3 36 ± 5 12hni 56154.25 −19.92 ± 0.10 1.78/11 0.0470 ± 0.0016 1.21/11 −0.0217 ± 0.0071 0.52/4 74.1 – 29 ± 4 – 25 ± 2 12mxx 56292.14 −21.60 ± 0.08 0.93/30 – – – – – 29 ± 2 – 26 ± 2 – 13ajg 56410.35 −22.42 ± 0.16 1.00/69 0.0376 ± 0.0033 1.86/50 0.0096 ± 0.0008 10.32/1 87.6 24 ± 2 25 ± 2 21 ± 2 19 ± 2 13bdl 56493.22 −20.36 ± 0.22 0.66/28 – – – – – – – – – 13bjz 56438.17 −20.81 ± 0.18 2.53/15 – – – – – – – 8 ± 2 – 13cjq 56506.28 −21.13 ± 0.09 0.66/45 0.0409 ± 0.0056 2.71/7 0.0046 ± 0.0052 0.79/2 49.3 – 25 ± 5 – 23 ± 3 13dcc 56612.35 −21.88 ± 0.15 0.59/49 0.0476 ± 0.0044 1.96/15 0.0122 ± 0.0007 0.88/3 62.3 – 28 ± 2 – 24 ± 3 13ehe 56669.54 −21.26 ± 0.20 0.92/31 0.0062 ± 0.0065 1.29/4 0.0158 ± 0.0007 0.14/1 37.9 – 114 ± 7 – 97 ± 10

Note—SLSNe with best sampled data, where the light curves can be fully characterized in their rise and fall times, peaks, early- and late-time declines, are highlighted in bold.

Peak magnitudes are in parenthesis for the cases where the peak is not sufficiently covered, so these represent magnitude upper limits. The peak magnitude for PTF 10nmn is taken from Yaron et al. (2018 in preparation), which includes a more complete coverage of the peak. In the case of PTF 12hni the late-time decay slope is negative because of the light curve rebrightening. The χ^2_ν are sometimes large because the formal errors in the observed magnitudes within the fitted time interval are very small (e.g. between 0.006 and 0.024 mag around peak for PTF 12dam).^a Slopes of the postpeak early- and late-time linear fit to the data (Sect. 4.2).^b Intersection between the postpeak early- and late-times linear fits to the data (in days after peak, Sect. 4.2).

30 De Cia et al.

B. APPENDIX FIGURES The figures below show the light curves of (i)PTF SLSNe-I in our sample, their rise and decay timescales in flux and magnitudes, the magnetar fits to the data, and their confidence levels.

Figure B1. Light curves of (i)PTF SLSNe-I in our sample for individual observed filters and rest-frame M_g (black). Both apparent and absolute magnitudes are corrected for Galactic foreground dust extinction (see Sect. 3.12). The solid lines show the second-order polynomial fit around peak (Sect. 4.1) and the postpeak early- and late-time decay linear fits to the data (Sect. 4.2). The horizontal dotted line marks the M = −21 mag “hystorical” threshold for SLSNe, for comparison.

Figure B2. Continuation of Fig. B1.

Figure B3. Continuation of Fig. B1.

Figure B4. Continuation of Fig. B1.

Figure B5. Continuation of Fig. B1.

PTF SLSN-I light curves 35

Figure B6. Rest-frame g-band light curves of the SLSNe-I in flux (black diamonds). The smoothed light curves (described in Sect. 4.3) are shown by the solid curves. The red squares indicate the auxiliary points introduced for the light-curve smoothing. The horizontal dotted line marks the half-flux limit, which is used to calculate the t_{rise,1/2} and t_{fall,1/2} timescales (Sect. 5.4), when the light curve is well-characterized between the half-flux limit and the peak (highlighted blue solid curves).

Figure B7. Continuation of Fig. B6.

Figure B8. Continuation of Fig. B6.

Figure B9. Continuation of Fig. B6.

Figure B10. Continuation of Fig. B6.

40 De Cia et al.

Figure B11. Same as Fig.B6, but for magnitudes. The horizontal dotted lines mark here the distance of 1 mag from peak, which is used to calculate the t^{Δ1mag}_{rise} and t^{Δ1mag}_{fall} timescales, when the light curves are well-characterized above this threshold (highlighted blue solid curves).

Figure B12. Continuation of Fig. B11.

Figure B13. Continuation of Fig. B11.

Figure B14. Continuation of Fig. B11.

Figure B15. Continuation of Fig. B11.

Figure B16. Magnetar fit to the bolometric light curves.

Figure B17. Continuation of Fig. B16.

PTF SLSN-I light curves 47

Figure B18. Confidence levels of the best-fit parameters for the magnetar model of PTF 09cnd.

Figure B19. Confidence levels of the best-fit parameters for the magnetar model of PTF 09cwl.

48 De Cia et al.

Figure B20. Confidence levels of the best-fit parameters for the magnetar model of PTF 10bjp.

Figure B21. Confidence levels of the best-fit parameters for the magnetar model of PTF 10cwr.

PTF SLSN-I light curves 49

Figure B22. Confidence levels of the best-fit parameters for the magnetar model of PTF 10hgi.

Figure B23. Confidence levels of the best-fit parameters for the magnetar model of PTF 10nmn.

50 De Cia et al.

Figure B24. Confidence levels of the best-fit parameters for the magnetar model of PTF 10vqv.

Figure B25. Confidence levels of the best-fit parameters for the magnetar model of PTF 10vwg.

PTF SLSN-I light curves 51

Figure B26. Confidence levels of the best-fit parameters for the magnetar model of PTF 11dij.

Figure B27. Confidence levels of the best-fit parameters for the magnetar model of PTF 11rks.

52 De Cia et al.

Figure B28. Confidence levels of the best-fit parameters for the magnetar model of PTF 12dam.

Figure B29. Confidence levels of the best-fit parameters for the magnetar model of PTF 12gty.

PTF SLSN-I light curves 53

Figure B30. Confidence levels of the best-fit parameters for the magnetar model of PTF 12mxx.

Figure B31. Confidence levels of the best-fit parameters for the magnetar model of PTF 13ajg.

54 De Cia et al. C. K-CORRECTION TABLES The k-corrections from r to rest-frame g (K_{gr}) and from i to rest-frame r (K_{ir}) for the (i)PTF SLSN sample are listed in the tables below.

Table C2. Kgr corrections

PTF ID 09as 09atu 09cnd 09cwl 10aagc 10bfz 10bjp 10cwr 10hgi 10nmn 10uhf 10vqv 10vwg z 0.1864 0.5014 0.2585 0.3502 0.2067 0.1699 0.3585 0.2301 0.0982 0.1236 0.2879 0.4520 0.1901 phase K_{gr}

−25 0.00 −0.50 −0.13 −0.30 −0.04 0.04 −0.31 −0.08 0.20 0.16 −0.19 −0.42 −0.01 −24 −0.00 −0.50 −0.14 −0.30 −0.04 0.04 −0.32 −0.09 0.20 0.15 −0.19 −0.42 −0.01 −23 −0.00 −0.49 −0.14 −0.30 −0.05 0.03 −0.32 −0.09 0.19 0.15 −0.19 −0.42 −0.01 −22 −0.01 −0.49 −0.14 −0.30 −0.05 0.03 −0.32 −0.09 0.19 0.14 −0.20 −0.42 −0.02 −22 −0.01 −0.49 −0.14 −0.31 −0.05 0.03 −0.32 −0.10 0.18 0.14 −0.20 −0.42 −0.02 −21 −0.02 −0.49 −0.15 −0.31 −0.06 0.02 −0.32 −0.10 0.18 0.13 −0.20 −0.42 −0.02 −20 −0.02 −0.49 −0.15 −0.31 −0.06 0.02 −0.32 −0.10 0.17 0.13 −0.20 −0.42 −0.03 −14 −0.04 −0.48 −0.17 −0.31 −0.08 −0.01 −0.32 −0.12 0.14 0.10 −0.22 −0.41 −0.05 −8 −0.06 −0.46 −0.19 −0.32 −0.10 −0.03 −0.33 −0.14 0.11 0.07 −0.24 −0.41 −0.07 −3 −0.08 −0.45 −0.20 −0.32 −0.12 −0.05 −0.33 −0.16 0.09 0.05 −0.25 −0.40 −0.09 0 −0.10 −0.45 −0.21 −0.33 −0.13 −0.06 −0.33 −0.17 0.07 0.03 −0.26 −0.40 −0.10 3 −0.10 −0.44 −0.22 −0.33 −0.14 −0.07 −0.34 −0.17 0.06 0.02 −0.26 −0.39 −0.11 6 −0.11 −0.44 −0.23 −0.33 −0.15 −0.08 −0.34 −0.18 0.04 0.01 −0.27 −0.39 −0.12 10 −0.13 −0.43 −0.23 −0.34 −0.16 −0.09 −0.34 −0.19 0.03 −0.01 −0.28 −0.39 −0.13 16 −0.14 −0.42 −0.25 −0.34 −0.17 −0.11 −0.34 −0.21 0.00 −0.03 −0.29 −0.38 −0.15 21 −0.15 −0.42 −0.26 −0.34 −0.18 −0.12 −0.35 −0.22 −0.01 −0.05 −0.30 −0.38 −0.16 22 −0.16 −0.42 −0.26 −0.35 −0.19 −0.13 −0.35 −0.22 −0.01 −0.05 −0.30 −0.38 −0.16 26 −0.17 −0.41 −0.27 −0.35 −0.20 −0.14 −0.35 −0.23 −0.03 −0.06 −0.31 −0.38 −0.17 47 −0.20 −0.39 −0.30 −0.36 −0.23 −0.18 −0.36 −0.26 −0.09 −0.12 −0.34 −0.36 −0.21 57 −0.22 −0.38 −0.31 −0.37 −0.24 −0.19 −0.36 −0.27 −0.11 −0.14 −0.35 −0.36 −0.22 57 −0.22 −0.38 −0.31 −0.37 −0.24 −0.19 −0.36 −0.27 −0.11 −0.14 −0.35 −0.36 −0.22 87 −0.24 −0.36 −0.34 −0.38 −0.27 −0.22 −0.37 −0.29 −0.16 −0.18 −0.37 −0.35 −0.25 154 −0.23 −0.35 −0.34 −0.38 −0.26 −0.21 −0.38 −0.29 −0.18 −0.19 −0.38 −0.35 −0.24 164 −0.23 −0.35 −0.33 −0.38 −0.25 −0.21 −0.38 −0.28 −0.18 −0.18 −0.37 −0.35 −0.23 214 −0.19 −0.36 −0.31 −0.38 −0.22 −0.17 −0.37 −0.26 −0.15 −0.16 −0.35 −0.35 −0.20 266 −0.18 −0.37 −0.29 −0.36 −0.21 −0.16 −0.37 −0.24 −0.13 −0.14 −0.33 −0.36 −0.18 321 −0.21 −0.38 −0.29 −0.35 −0.24 −0.19 −0.36 −0.26 −0.15 −0.17 −0.32 −0.36 −0.22

PTF SLSN-I light curves 55 Table C3. Countinuation of Table C2.

PTF ID 11dij 11hrq 11rks 12dam 12gty 12hni 12mxx 13ajg 13bdl 13bjz 13cjq 13dcc 13ehe z 0.1429 0.0571 0.1924 0.1075 0.1768 0.1056 0.3274 0.7403 0.4030 0.2712 0.3962 0.4308 0.3434 phase K_{gr}

−25 0.11 0.26 −0.01 0.19 0.02 0.19 −0.26 −0.81 −0.37 −0.16 −0.36 −0.40 −0.29 −24 0.11 0.25 −0.01 0.18 0.02 0.19 −0.27 −0.80 −0.37 −0.16 −0.36 −0.39 −0.29 −23 0.10 0.25 −0.02 0.18 0.02 0.18 −0.27 −0.79 −0.37 −0.16 −0.36 −0.39 −0.29 −22 0.10 0.24 −0.02 0.17 0.01 0.18 −0.27 −0.78 −0.36 −0.17 −0.36 −0.39 −0.29 −22 0.09 0.24 −0.03 0.17 0.01 0.17 −0.27 −0.77 −0.36 −0.17 −0.36 −0.39 −0.30 −21 0.09 0.23 −0.03 0.16 0.01 0.17 −0.27 −0.76 −0.36 −0.17 −0.36 −0.39 −0.30 −20 0.08 0.23 −0.03 0.16 0.00 0.16 −0.27 −0.75 −0.36 −0.17 −0.36 −0.39 −0.30 −14 0.06 0.20 −0.05 0.13 −0.02 0.13 −0.28 −0.70 −0.36 −0.19 −0.36 −0.39 −0.31 −8 0.03 0.17 −0.08 0.10 −0.05 0.10 −0.29 −0.64 −0.36 −0.21 −0.36 −0.38 −0.31 −3 0.01 0.14 −0.09 0.07 −0.06 0.08 −0.30 −0.60 −0.36 −0.22 −0.36 −0.38 −0.32 0 −0.00 0.13 −0.11 0.06 −0.08 0.06 −0.31 −0.57 −0.36 −0.23 −0.35 −0.38 −0.32 3 −0.01 0.12 −0.11 0.04 −0.09 0.05 −0.31 −0.55 −0.36 −0.24 −0.35 −0.38 −0.33 6 −0.03 0.10 −0.13 0.03 −0.10 0.03 −0.32 −0.52 −0.36 −0.25 −0.35 −0.37 −0.33 10 −0.04 0.09 −0.14 0.02 −0.11 0.02 −0.32 −0.49 −0.36 −0.25 −0.35 −0.37 −0.33 16 −0.06 0.06 −0.15 −0.01 −0.13 −0.01 −0.33 −0.45 −0.35 −0.27 −0.35 −0.37 −0.34 21 −0.07 0.05 −0.16 −0.02 −0.14 −0.02 −0.34 −0.42 −0.35 −0.28 −0.35 −0.37 −0.34 22 −0.08 0.04 −0.16 −0.03 −0.14 −0.02 −0.34 −0.42 −0.35 −0.28 −0.35 −0.37 −0.34 26 −0.09 0.03 −0.17 −0.04 −0.15 −0.04 −0.34 −0.39 −0.35 −0.29 −0.35 −0.36 −0.35 47 −0.14 −0.03 −0.21 −0.10 −0.19 −0.10 −0.36 −0.29 −0.35 −0.32 −0.35 −0.36 −0.36 57 −0.15 −0.05 −0.23 −0.12 −0.20 −0.12 −0.37 −0.26 −0.35 −0.33 −0.35 −0.36 −0.37 57 −0.15 −0.05 −0.23 −0.12 −0.20 −0.12 −0.37 −0.26 −0.35 −0.33 −0.35 −0.36 −0.37 87 −0.19 −0.10 −0.25 −0.17 −0.23 −0.16 −0.38 −0.19 −0.35 −0.35 −0.35 −0.35 −0.38 154 −0.20 −0.14 −0.24 −0.18 −0.22 −0.18 −0.39 −0.20 −0.35 −0.36 −0.35 −0.35 −0.39 164 −0.19 −0.13 −0.23 −0.18 −0.21 −0.18 −0.39 −0.22 −0.35 −0.35 −0.36 −0.35 −0.39 214 −0.16 −0.11 −0.20 −0.15 −0.18 −0.15 −0.37 −0.31 −0.36 −0.33 −0.36 −0.36 −0.38 266 −0.14 −0.09 −0.19 −0.13 −0.16 −0.13 −0.35 −0.40 −0.36 −0.31 −0.36 −0.37 −0.36 321 −0.17 −0.11 −0.22 −0.16 −0.20 −0.16 −0.34 −0.40 −0.36 −0.30 −0.36 −0.36 −0.35

56 De Cia et al. Table C4. Kri corrections

PTF ID 09as 09atu 09cnd 09cwl 10aagc 10bfz 10bjp 10cwr 10hgi 10nmn 10uhf 10vqv 10vwg z 0.1864 0.5014 0.2585 0.3502 0.2067 0.1699 0.3585 0.2301 0.0982 0.1236 0.2879 0.4520 0.1901 phase K_{ri}

−25 −0.16 −0.70 −0.26 −0.44 −0.20 −0.13 −0.46 −0.23 −0.05 −0.08 −0.30 −0.62 −0.17 −24 −0.16 −0.70 −0.26 −0.44 −0.20 −0.13 −0.46 −0.23 −0.05 −0.08 −0.30 −0.61 −0.17 −23 −0.16 −0.70 −0.26 −0.44 −0.20 −0.13 −0.46 −0.23 −0.06 −0.08 −0.30 −0.61 −0.17 −22 −0.16 −0.69 −0.26 −0.44 −0.20 −0.13 −0.46 −0.23 −0.06 −0.08 −0.30 −0.61 −0.17 −22 −0.16 −0.69 −0.26 −0.44 −0.20 −0.13 −0.46 −0.23 −0.06 −0.09 −0.30 −0.61 −0.17 −21 −0.16 −0.69 −0.26 −0.44 −0.20 −0.13 −0.46 −0.23 −0.06 −0.09 −0.30 −0.61 −0.17 −20 −0.16 −0.68 −0.26 −0.44 −0.20 −0.13 −0.46 −0.23 −0.06 −0.09 −0.30 −0.60 −0.17 −14 −0.16 −0.67 −0.26 −0.43 −0.20 −0.14 −0.45 −0.23 −0.07 −0.10 −0.30 −0.59 −0.17 −8 −0.16 −0.65 −0.26 −0.43 −0.20 −0.14 −0.45 −0.23 −0.08 −0.11 −0.30 −0.58 −0.17 −3 −0.17 −0.63 −0.26 −0.43 −0.20 −0.14 −0.44 −0.23 −0.09 −0.11 −0.30 −0.56 −0.17 0 −0.17 −0.62 −0.26 −0.42 −0.20 −0.14 −0.44 −0.23 −0.09 −0.12 −0.30 −0.56 −0.17 3 −0.17 −0.61 −0.26 −0.42 −0.19 −0.14 −0.44 −0.23 −0.10 −0.12 −0.30 −0.55 −0.17 6 −0.17 −0.60 −0.26 −0.42 −0.19 −0.15 −0.43 −0.22 −0.10 −0.13 −0.30 −0.55 −0.17 10 −0.17 −0.60 −0.26 −0.42 −0.19 −0.15 −0.43 −0.22 −0.11 −0.13 −0.30 −0.54 −0.17 16 −0.17 −0.58 −0.25 −0.41 −0.19 −0.15 −0.42 −0.22 −0.12 −0.14 −0.29 −0.53 −0.17 21 −0.17 −0.57 −0.25 −0.41 −0.19 −0.15 −0.42 −0.22 −0.12 −0.14 −0.29 −0.52 −0.17 22 −0.17 −0.57 −0.25 −0.41 −0.19 −0.15 −0.42 −0.22 −0.12 −0.14 −0.29 −0.52 −0.17 26 −0.17 −0.56 −0.25 −0.40 −0.19 −0.16 −0.42 −0.22 −0.13 −0.15 −0.29 −0.51 −0.17 47 −0.18 −0.52 −0.24 −0.39 −0.19 −0.17 −0.40 −0.21 −0.15 −0.17 −0.28 −0.48 −0.18 57 −0.18 −0.51 −0.24 −0.38 −0.19 −0.17 −0.39 −0.21 −0.17 −0.18 −0.28 −0.47 −0.18 57 −0.18 −0.51 −0.24 −0.38 −0.19 −0.17 −0.39 −0.21 −0.17 −0.18 −0.28 −0.47 −0.18 87 −0.18 −0.48 −0.23 −0.36 −0.19 −0.18 −0.37 −0.21 −0.19 −0.20 −0.26 −0.44 −0.18 154 −0.20 −0.45 −0.22 −0.32 −0.19 −0.20 −0.32 −0.20 −0.23 −0.22 −0.24 −0.42 −0.19 164 −0.20 −0.45 −0.22 −0.31 −0.19 −0.20 −0.32 −0.20 −0.23 −0.23 −0.23 −0.42 −0.19 214 −0.20 −0.45 −0.21 −0.29 −0.20 −0.20 −0.30 −0.20 −0.23 −0.22 −0.22 −0.42 −0.20 266 −0.20 −0.45 −0.22 −0.28 −0.20 −0.20 −0.30 −0.20 −0.20 −0.20 −0.23 −0.42 −0.20 321 −0.19 −0.43 −0.24 −0.30 −0.19 −0.18 −0.31 −0.22 −0.13 −0.16 −0.25 −0.40 −0.19

PTF SLSN-I light curves 57 Table C5. Continuation of Table C4.

PTF ID 11dij 11hrq 11rks 12dam 12gty 12hni 12mxx 13ajg 13bdl 13bjz 13cjq 13dcc 13ehe z 0.1429 0.0571 0.1924 0.1075 0.1768 0.1056 0.3274 0.7403 0.4030 0.2712 0.3962 0.4308 0.3434 phase K_{ri}

−25 −0.09 0.02 −0.17 −0.06 −0.14 −0.06 −0.38 −0.98 −0.54 −0.28 −0.53 −0.58 −0.42 −24 −0.09 0.02 −0.17 −0.07 −0.14 −0.06 −0.38 −0.98 −0.54 −0.28 −0.53 −0.58 −0.42 −23 −0.09 0.02 −0.17 −0.07 −0.14 −0.07 −0.38 −0.97 −0.54 −0.28 −0.53 −0.58 −0.42 −22 −0.09 0.02 −0.17 −0.07 −0.14 −0.07 −0.38 −0.96 −0.54 −0.28 −0.53 −0.58 −0.42 −22 −0.09 0.01 −0.17 −0.07 −0.14 −0.07 −0.38 −0.95 −0.54 −0.28 −0.53 −0.58 −0.42 −21 −0.10 0.01 −0.17 −0.07 −0.14 −0.07 −0.38 −0.95 −0.54 −0.28 −0.53 −0.58 −0.42 −20 −0.10 0.01 −0.17 −0.07 −0.14 −0.07 −0.38 −0.94 −0.54 −0.28 −0.53 −0.57 −0.42 −14 −0.10 0.00 −0.17 −0.08 −0.15 −0.08 −0.38 −0.90 −0.53 −0.28 −0.52 −0.56 −0.42 −8 −0.11 −0.01 −0.17 −0.09 −0.15 −0.09 −0.38 −0.86 −0.52 −0.28 −0.51 −0.55 −0.41 −3 −0.11 −0.01 −0.17 −0.10 −0.15 −0.10 −0.38 −0.82 −0.51 −0.27 −0.50 −0.54 −0.41 0 −0.12 −0.02 −0.17 −0.11 −0.15 −0.10 −0.38 −0.80 −0.50 −0.27 −0.50 −0.54 −0.41 3 −0.12 −0.02 −0.17 −0.11 −0.15 −0.11 −0.37 −0.78 −0.50 −0.27 −0.49 −0.53 −0.41 6 −0.12 −0.03 −0.18 −0.11 −0.15 −0.11 −0.37 −0.76 −0.50 −0.27 −0.49 −0.53 −0.41 10 −0.12 −0.03 −0.18 −0.12 −0.16 −0.12 −0.37 −0.74 −0.49 −0.27 −0.48 −0.52 −0.40 16 −0.13 −0.04 −0.18 −0.13 −0.16 −0.13 −0.37 −0.70 −0.48 −0.27 −0.47 −0.51 −0.40 21 −0.13 −0.05 −0.18 −0.13 −0.16 −0.13 −0.37 −0.68 −0.48 −0.27 −0.47 −0.50 −0.40 22 −0.13 −0.05 −0.18 −0.14 −0.16 −0.13 −0.37 −0.67 −0.47 −0.27 −0.47 −0.50 −0.40 26 −0.14 −0.05 −0.18 −0.14 −0.16 −0.14 −0.36 −0.65 −0.47 −0.27 −0.46 −0.50 −0.39 47 −0.15 −0.08 −0.18 −0.17 −0.17 −0.16 −0.35 −0.57 −0.45 −0.26 −0.44 −0.47 −0.38 57 −0.16 −0.09 −0.18 −0.18 −0.17 −0.17 −0.35 −0.53 −0.44 −0.26 −0.43 −0.46 −0.37 57 −0.16 −0.09 −0.18 −0.18 −0.17 −0.17 −0.35 −0.53 −0.44 −0.26 −0.43 −0.46 −0.37 87 −0.18 −0.12 −0.18 −0.20 −0.18 −0.20 −0.33 −0.46 −0.41 −0.25 −0.40 −0.44 −0.35 154 −0.21 −0.16 −0.19 −0.23 −0.20 −0.23 −0.29 −0.42 −0.37 −0.22 −0.36 −0.41 −0.31 164 −0.21 −0.16 −0.19 −0.24 −0.20 −0.24 −0.29 −0.42 −0.37 −0.22 −0.36 −0.40 −0.30 214 −0.21 −0.16 −0.20 −0.23 −0.20 −0.23 −0.27 −0.45 −0.36 −0.21 −0.35 −0.40 −0.28 266 −0.20 −0.13 −0.20 −0.21 −0.20 −0.20 −0.26 −0.49 −0.36 −0.22 −0.35 −0.40 −0.28 321 −0.16 −0.06 −0.19 −0.15 −0.18 −0.15 −0.27 −0.49 −0.37 −0.25 −0.37 −0.39 −0.29

58 De Cia et al.

Table D6. PTF 09as photometry data.

MJD Phase m Filter Telescope 54910.417 −6.56 19.71 ± 0.11 g p48 54915.164 −2.56 19.85 ± 0.14 g p48 54915.244 −2.49 19.72 ± 0.12 g p48 54918.197 0.00 20.13 ± 0.11 r p60 54918.199 0.00 19.80 ± 0.12 i p60 54918.210 0.01 20.19 ± 0.15 g p48 54919.195 0.84 20.19 ± 0.12 r p60 54919.197 0.84 19.86 ± 0.13 i p60 54920.235 1.72 20.38 ± 0.22 r p60 54921.206 2.54 20.85 ± 0.27 g p48 54921.248 2.57 20.29 ± 0.13 r p60 54921.249 2.57 19.91 ± 0.13 i p60 54921.294 2.61 20.37 ± 0.16 g p48 54922.186 3.36 20.32 ± 0.19 r p60 54922.187 3.36 19.89 ± 0.18 i p60 54923.199 4.22 20.77 ± 0.25 g p48 54923.283 4.29 20.40 ± 0.13 r p60 54923.285 4.29 19.99 ± 0.14 i p60 54923.286 4.29 20.70 ± 0.22 g p48 54925.376 6.05 20.47 ± 0.26 r p60 54925.377 6.05 20.37 ± 0.28 i p60 54926.214 6.76 20.82 ± 0.22 r p60 54926.215 6.76 20.25 ± 0.19 i p60 54927.223 7.61 20.04 ± 0.21 i p60 54928.297 8.51 20.72 ± 0.22 r p60 54928.299 8.52 20.39 ± 0.21 i p60 54934.333 13.60 21.42 ± 0.27 r p60 54934.335 13.60 20.68 ± 0.21 i p60 54935.427 14.52 20.51 ± 0.34 i p60 54938.202 16.86 21.39 ± 0.24 r p60 54938.204 16.87 21.05 ± 0.25 i p60

D. PHOTOMETRIC DATA All magnitudes are in the AB system. The absolute magnitudes in rest-frame g-band are derived from M_g = m_r − DM − K_{gr}, where DM is the distance modulus, m_r is corrected for foreground Galactic extinction (Table 1), and K_{gr} is the k-correction (Table C2), as described in Sect. 3.12. The photometric data in Tables D6 to D71 are available as machine-readable electronic tables in the online version of the paper (future link). The UV photometry from Swift was not corrected from host-galaxy contribution, but this should be minimal (see Sect. 3.7). The table references are: [I] Quimby et al. (2011); [II] Pastorello et al. (2010); [III] Inserra et al. (2013); [IV] Nicholl et al. (2013), Chen et al. (2015); [V] Vreeswijk et al. (2014).

PTF SLSN-I light curves 59

Table D7. PTF 09as rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 54918.197 0.00 20.29 ± 0.11 −19.50 p60 54919.195 0.84 20.36 ± 0.12 −19.43 p60 54920.235 1.72 20.54 ± 0.22 −19.24 p60 54921.248 2.57 20.45 ± 0.13 −19.33 p60 54922.186 3.36 20.49 ± 0.19 −19.30 p60 54923.283 4.29 20.57 ± 0.13 −19.21 p60 54925.376 6.05 20.64 ± 0.26 −19.14 p60 54926.214 6.76 21.00 ± 0.22 −18.78 p60 54928.297 8.51 20.90 ± 0.22 −18.88 p60 54934.333 13.60 21.62 ± 0.27 −18.16 p60 54938.202 16.86 21.59 ± 0.24 −18.19 p60

60 De Cia et al.

Table D8. PTF 09atu photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 54974.325 −58.61 22.43 ± 0.29 r p48 55064.163 1.23 20.09 ± 0.10 i p60 55016.222 −30.70 20.58 ± 0.15 r p48 55064.165 1.23 20.04 ± 0.10 i p60 55016.321 −30.64 20.93 ± 0.33 r p48 55066.154 2.55 20.32 ± 0.08 g p60 55025.227 −24.71 20.45 ± 0.11 r p48 55066.157 2.56 19.99 ± 0.08 r p60 55025.343 −24.63 20.36 ± 0.13 r p48 55066.160 2.56 20.01 ± 0.09 r p60 55029.337 −21.97 20.39 ± 0.11 r p60 55066.162 2.56 20.07 ± 0.10 i p60 55029.339 −21.97 20.52 ± 0.15 i p60 55066.165 2.56 19.98 ± 0.10 i p60 55035.250 −18.03 20.20 ± 0.09 r p48 55067.153 3.22 20.28 ± 0.11 g p60 55035.339 −17.97 20.32 ± 0.11 r p48 55067.156 3.22 20.09 ± 0.08 r p60 55035.389 −17.94 20.38 ± 0.13 g p60 55067.158 3.22 20.03 ± 0.08 r p60 55040.356 −14.63 20.24 ± 0.10 g p60 55067.161 3.22 20.13 ± 0.09 i p60 55050.222 −8.06 20.17 ± 0.18 r p48 55067.163 3.23 20.17 ± 0.09 i p60 55050.297 −8.01 20.20 ± 0.29 r p48 55068.188 3.91 20.33 ± 0.08 g p60 55056.321 −4.00 20.12 ± 0.21 r p48 55068.191 3.91 20.10 ± 0.09 r p60 55058.193 −2.75 20.00 ± 0.09 r p48 55068.193 3.91 20.07 ± 0.08 r p60 55058.275 −2.69 19.96 ± 0.14 r p48 55068.195 3.91 20.14 ± 0.09 i p60 55059.163 −2.10 19.99 ± 0.08 r p60 55068.197 3.91 20.02 ± 0.09 i p60 55059.166 −2.10 20.00 ± 0.08 r p60 55069.156 4.55 20.32 ± 0.08 g p60 55059.168 −2.10 19.99 ± 0.09 i p60 55069.159 4.55 20.09 ± 0.10 r p60 55059.170 −2.10 20.10 ± 0.10 i p60 55069.161 4.56 20.04 ± 0.08 r p60 55060.211 −1.40 20.32 ± 0.09 g p60 55069.163 4.56 20.11 ± 0.10 i p60 55060.214 −1.40 19.97 ± 0.08 r p60 55069.166 4.56 20.05 ± 0.09 i p60 55060.216 −1.40 19.99 ± 0.08 r p60 55107.182 29.88 20.65 ± 0.27 g p60 55060.218 −1.40 20.10 ± 0.10 i p60 55107.186 29.88 20.84 ± 0.27 i p60 55060.221 −1.40 20.11 ± 0.10 i p60 55138.095 50.47 20.64 ± 0.24 i p60 55061.165 −0.77 20.31 ± 0.08 g p60 55142.090 53.13 20.68 ± 0.28 r p60 55061.168 −0.77 20.03 ± 0.08 r p60 55061.170 −0.77 19.96 ± 0.08 r p60 55061.172 −0.76 20.07 ± 0.12 i p60 55061.175 −0.76 20.11 ± 0.10 i p60 55062.158 −0.11 20.23 ± 0.07 g p60 55062.161 −0.11 20.04 ± 0.08 r p60 55062.163 −0.10 20.05 ± 0.10 r p60 55062.166 −0.10 20.19 ± 0.10 i p60 55062.168 −0.10 20.05 ± 0.09 i p60 55062.200 −0.08 22.38 ± 0.31 UVW1 Swift/UVOT 55062.206 −0.08 21.90 ± 0.35 u Swift/UVOT 55063.160 0.56 19.98 ± 0.08 r p60 55063.163 0.56 20.03 ± 0.09 r p60 55063.165 0.56 20.12 ± 0.09 i p60 55063.167 0.56 20.07 ± 0.09 i p60 55063.232 0.61 19.97 ± 0.14 r p48 55063.277 0.64 19.91 ± 0.10 r p48 55064.155 1.22 20.31 ± 0.08 g p60 55064.158 1.22 19.93 ± 0.08 r p60 55064.161 1.23 19.95 ± 0.08 r p60

PTF SLSN-I light curves 61

Table D9. PTF 09atu rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 54974.325 −58.61 23.00 ± 0.29 −19.27 p48 55016.222 −30.70 21.14 ± 0.15 −21.13 p48 55016.321 −30.64 21.50 ± 0.33 −20.77 p48 55025.227 −24.71 21.01 ± 0.11 −21.26 p48 55025.343 −24.63 20.93 ± 0.13 −21.34 p48 55029.337 −21.97 20.94 ± 0.11 −21.33 p60 55035.250 −18.03 20.74 ± 0.09 −21.53 p48 55035.339 −17.97 20.87 ± 0.11 −21.40 p48 55050.222 −8.06 20.69 ± 0.18 −21.57 p48 55050.297 −8.01 20.73 ± 0.29 −21.54 p48 55056.321 −4.00 20.64 ± 0.21 −21.63 p48 55058.193 −2.75 20.52 ± 0.09 −21.75 p48 55058.275 −2.69 20.48 ± 0.14 −21.79 p48 55059.163 −2.10 20.51 ± 0.08 −21.76 p60 55059.166 −2.10 20.51 ± 0.08 −21.76 p60 55060.214 −1.40 20.49 ± 0.08 −21.78 p60 55060.216 −1.40 20.51 ± 0.08 −21.76 p60 55061.168 −0.77 20.54 ± 0.08 −21.73 p60 55061.170 −0.77 20.48 ± 0.08 −21.79 p60 55062.161 −0.11 20.55 ± 0.08 −21.72 p60 55062.163 −0.10 20.57 ± 0.10 −21.70 p60 55063.160 0.56 20.49 ± 0.08 −21.78 p60 55063.163 0.56 20.54 ± 0.09 −21.73 p60 55063.232 0.61 20.48 ± 0.14 −21.78 p48 55063.277 0.64 20.42 ± 0.10 −21.84 p48 55064.158 1.22 20.44 ± 0.08 −21.83 p60 55064.161 1.23 20.46 ± 0.08 −21.81 p60 55066.157 2.56 20.50 ± 0.08 −21.77 p60 55066.160 2.56 20.51 ± 0.09 −21.75 p60 55067.156 3.22 20.60 ± 0.08 −21.67 p60 55067.158 3.22 20.54 ± 0.08 −21.73 p60 55068.191 3.91 20.61 ± 0.09 −21.66 p60 55068.193 3.91 20.57 ± 0.08 −21.70 p60 55069.159 4.55 20.60 ± 0.10 −21.67 p60 55069.161 4.56 20.55 ± 0.08 −21.72 p60 55142.090 53.13 21.13 ± 0.28 −21.14 p60 55205.556 95.40 23.08 ± 0.09 −19.18 p200 I

62 De Cia et al.

Table D10. PTF 09cnd photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 55025.378 −48.45 20.66 ± 0.26 r p48 55064.148 −17.64 18.54 ± 0.08 r p60 55025.418 −48.41 20.49 ± 0.29 r p48 55064.151 −17.64 18.76 ± 0.11 i p60 55035.218 −40.63 20.15 ± 0.12 r p48 55064.153 −17.64 18.74 ± 0.11 i p60 55035.313 −40.55 20.31 ± 0.13 r p48 55065.829 −16.30 19.41 ± 0.07 UVM2 Swift/UVOT 55049.254 −29.47 19.05 ± 0.12 r p48 55065.830 −16.30 18.76 ± 0.07 UVW1 Swift/UVOT 55049.360 −29.39 18.93 ± 0.14 r p48 55065.830 −16.30 18.13 ± 0.06 u Swift/UVOT 55052.277 −27.07 18.85 ± 0.09 r p48 55065.831 −16.30 19.66 ± 0.08 UVW2 Swift/UVOT 55052.360 −27.01 18.73 ± 0.12 r p48 55066.141 −16.06 18.26 ± 0.08 g p60 55054.345 −25.43 18.62 ± 0.09 g p60 55066.145 −16.05 18.47 ± 0.09 r p60 55054.347 −25.43 18.80 ± 0.10 r p60 55066.147 −16.05 18.48 ± 0.08 r p60 55054.348 −25.43 19.02 ± 0.13 i p60 55066.149 −16.05 18.67 ± 0.11 i p60 55056.245 −23.92 18.67 ± 0.07 r p48 55066.152 −16.05 18.73 ± 0.11 i p60 55056.335 −23.85 18.75 ± 0.09 r p48 55067.140 −15.26 18.29 ± 0.08 g p60 55059.147 −21.61 18.42 ± 0.08 g p60 55067.144 −15.26 18.47 ± 0.08 r p60 55059.151 −21.61 18.61 ± 0.09 r p60 55067.146 −15.26 18.47 ± 0.09 r p60 55059.153 −21.61 18.60 ± 0.09 r p60 55067.148 −15.26 18.73 ± 0.11 i p60 55059.156 −21.61 18.97 ± 0.13 i p60 55067.151 −15.25 18.72 ± 0.11 i p60 55059.158 −21.60 18.91 ± 0.13 i p60 55067.226 −15.19 18.36 ± 0.07 r p48 55060.198 −20.78 18.43 ± 0.08 g p60 55067.270 −15.16 18.40 ± 0.07 r p48 55060.201 −20.78 18.59 ± 0.09 r p60 55068.139 −14.47 18.26 ± 0.08 g p60 55060.204 −20.77 18.59 ± 0.09 r p60 55068.143 −14.47 18.42 ± 0.08 r p60 55060.206 −20.77 18.92 ± 0.12 i p60 55068.145 −14.46 18.39 ± 0.08 r p60 55060.208 −20.77 18.91 ± 0.12 i p60 55068.147 −14.46 18.68 ± 0.11 i p60 55061.151 −20.02 18.37 ± 0.08 g p60 55068.150 −14.46 18.70 ± 0.11 i p60 55061.155 −20.02 18.57 ± 0.09 r p60 55068.259 −14.37 18.14 ± 0.09 B p60 55061.158 −20.02 18.59 ± 0.08 r p60 55069.015 −13.77 19.62 ± 0.09 UVM2 Swift/UVOT 55061.160 −20.01 18.87 ± 0.12 i p60 55069.017 −13.77 18.90 ± 0.07 UVW1 Swift/UVOT 55061.162 −20.01 18.89 ± 0.13 i p60 55069.019 −13.77 19.68 ± 0.08 UVW2 Swift/UVOT 55061.290 −19.91 18.60 ± 0.08 r p48 55069.019 −13.77 18.06 ± 0.06 u Swift/UVOT 55061.921 −19.41 19.30 ± 0.07 UVM2 Swift/UVOT 55069.138 −13.67 18.23 ± 0.07 g p60 55061.930 −19.40 18.81 ± 0.06 UVW1 Swift/UVOT 55069.142 −13.67 18.44 ± 0.08 r p60 55061.936 −19.40 18.14 ± 0.06 u Swift/UVOT 55069.145 −13.67 18.42 ± 0.08 r p60 55061.939 −19.40 19.57 ± 0.08 UVW2 Swift/UVOT 55069.147 −13.67 18.68 ± 0.11 i p60 55062.145 −19.23 18.35 ± 0.08 g p60 55069.149 −13.67 18.73 ± 0.11 i p60 55062.149 −19.23 18.54 ± 0.08 r p60 55073.635 −10.10 19.66 ± 0.08 UVM2 Swift/UVOT 55062.151 −19.23 18.58 ± 0.09 r p60 55073.641 −10.10 18.91 ± 0.06 UVW1 Swift/UVOT 55062.153 −19.22 18.83 ± 0.12 i p60 55073.645 −10.09 18.05 ± 0.06 u Swift/UVOT 55062.156 −19.22 18.85 ± 0.12 i p60 55073.647 −10.09 19.87 ± 0.08 UVW2 Swift/UVOT 55062.162 −19.22 18.51 ± 0.07 r p48 55077.314 −7.18 19.86 ± 0.09 UVM2 Swift/UVOT 55063.144 −18.44 18.36 ± 0.08 g p60 55077.316 −7.18 18.97 ± 0.07 UVW1 Swift/UVOT 55063.148 −18.43 18.57 ± 0.08 r p60 55077.452 −7.07 17.96 ± 0.07 u Swift/UVOT 55063.150 −18.43 18.56 ± 0.09 r p60 55077.453 −7.07 19.73 ± 0.10 UVW2 Swift/UVOT 55063.153 −18.43 18.80 ± 0.12 i p60 55084.014 −1.85 19.80 ± 0.09 UVM2 Swift/UVOT 55063.155 −18.43 18.82 ± 0.12 i p60 55084.018 −1.85 19.03 ± 0.07 UVW1 Swift/UVOT 55064.142 −17.64 18.34 ± 0.08 g p60 55084.020 −1.85 17.98 ± 0.06 u Swift/UVOT 55064.146 −17.64 18.53 ± 0.08 r p60 55084.022 −1.85 19.99 ± 0.09 UVW2 Swift/UVOT

PTF SLSN-I light curves 63

Table D11. Continuation of Table D10. MJD Phase m Filter Telescope 55084.213 −1.70 18.20 ± 0.07 r p48 55084.257 −1.66 18.23 ± 0.08 r p48 55097.812 9.11 20.47 ± 0.15 UVM2 Swift/UVOT 55097.814 9.11 19.71 ± 0.11 UVW1 Swift/UVOT 55097.815 9.11 18.37 ± 0.07 u Swift/UVOT 55097.816 9.11 20.56 ± 0.12 UVW2 Swift/UVOT 55107.174 16.55 18.25 ± 0.08 g p60 55107.176 16.55 18.40 ± 0.08 r p60 55107.177 16.55 18.61 ± 0.11 i p60 55107.376 16.71 20.91 ± 0.18 UVM2 Swift/UVOT 55107.379 16.71 20.07 ± 0.12 UVW1 Swift/UVOT 55107.382 16.71 18.77 ± 0.09 u Swift/UVOT 55107.383 16.71 21.53 ± 0.19 UVW2 Swift/UVOT 55123.141 29.24 18.64 ± 0.10 g p60 55123.143 29.24 18.55 ± 0.09 r p60 55123.144 29.24 18.72 ± 0.12 i p60 55123.147 29.24 18.71 ± 0.13 B p60 55137.129 40.35 18.90 ± 0.11 g p60 55137.131 40.35 18.71 ± 0.10 r p60 55137.131 40.35 18.86 ± 0.13 i p60 55138.077 41.10 18.95 ± 0.11 g p60 55138.079 41.11 18.80 ± 0.09 r p60 55138.080 41.11 18.82 ± 0.12 i p60 55142.104 44.30 19.09 ± 0.12 g p60 55142.106 44.31 18.89 ± 0.10 r p60 55142.107 44.31 18.92 ± 0.13 i p60 55142.110 44.31 19.31 ± 0.19 B p60 55166.547 63.73 19.36 ± 0.12 r p60 55166.549 63.73 19.40 ± 0.17 i p60 55168.540 65.31 19.79 ± 0.18 g p60 55168.542 65.31 19.49 ± 0.13 r p60 55168.543 65.31 19.35 ± 0.22 i p60 55169.539 66.10 19.41 ± 0.30 i p60 55181.504 75.61 20.92 ± 0.36 g p60 55181.505 75.61 19.60 ± 0.16 r p60 55181.507 75.61 19.90 ± 0.24 i p60 55183.502 77.20 20.88 ± 0.34 g p60 55183.504 77.20 19.88 ± 0.26 i p60 55183.508 77.20 20.30 ± 0.34 B p60 55184.504 77.99 20.19 ± 0.35 B p60 55185.495 78.78 19.46 ± 0.18 r p60 55189.486 81.95 19.82 ± 0.18 r p60 55202.474 92.27 20.33 ± 0.23 r p60 55202.476 92.28 19.91 ± 0.23 i p60 55203.448 93.05 20.54 ± 0.28 r p60 55205.000 94.28 21.03 ± 0.20 r P200

64 De Cia et al.

Table D12. PTF 09cnd rest-frame g photometry data.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 55025.378 −48.45 20.85 ± 0.26 −19.73 p48 55185.495 78.78 19.86 ± 0.18 −20.73 p60 55025.418 −48.41 20.68 ± 0.29 −19.91 p48 55189.486 81.95 20.22 ± 0.18 −20.37 p60 55035.218 −40.63 20.34 ± 0.12 −20.24 p48 55202.474 92.27 20.73 ± 0.23 −19.85 p60 55035.313 −40.55 20.50 ± 0.13 −20.08 p48 55203.448 93.05 20.94 ± 0.28 −19.64 p60 55049.254 −29.47 19.25 ± 0.12 −21.34 p48 55205.000 94.28 21.44 ± 0.20 −19.14 P200 55049.360 −29.39 19.13 ± 0.14 −21.46 p48 55052.277 −27.07 19.04 ± 0.09 −21.54 p48 55052.360 −27.01 18.93 ± 0.12 −21.66 p48 55054.347 −25.43 19.00 ± 0.10 −21.58 p60 55056.245 −23.92 18.88 ± 0.07 −21.71 p48 55056.335 −23.85 18.96 ± 0.09 −21.63 p48 55059.151 −21.61 18.83 ± 0.09 −21.76 p60 55059.153 −21.61 18.81 ± 0.09 −21.77 p60 55060.201 −20.78 18.81 ± 0.09 −21.78 p60 55060.204 −20.77 18.81 ± 0.09 −21.78 p60 55061.155 −20.02 18.79 ± 0.09 −21.79 p60 55061.158 −20.02 18.81 ± 0.08 −21.77 p60 55061.290 −19.91 18.82 ± 0.08 −21.77 p48 55062.149 −19.23 18.76 ± 0.08 −21.83 p60 55062.151 −19.23 18.80 ± 0.09 −21.78 p60 55062.162 −19.22 18.73 ± 0.07 −21.86 p48 55063.148 −18.43 18.79 ± 0.08 −21.80 p60 55063.150 −18.43 18.78 ± 0.09 −21.80 p60 55064.146 −17.64 18.76 ± 0.08 −21.83 p60 55064.148 −17.64 18.76 ± 0.08 −21.82 p60 55066.145 −16.05 18.70 ± 0.09 −21.88 p60 55066.147 −16.05 18.71 ± 0.08 −21.88 p60 55067.144 −15.26 18.70 ± 0.08 −21.88 p60 55067.146 −15.26 18.71 ± 0.09 −21.88 p60 55067.226 −15.19 18.59 ± 0.07 −21.99 p48 55067.270 −15.16 18.63 ± 0.07 −21.95 p48 55068.143 −14.47 18.65 ± 0.08 −21.93 p60 55068.145 −14.46 18.62 ± 0.08 −21.96 p60 55069.142 −13.67 18.68 ± 0.08 −21.91 p60 55069.145 −13.67 18.65 ± 0.08 −21.93 p60 55081.750 −3.65 18.50 ± 0.04 −22.09 Wise I 55084.213 −1.70 18.47 ± 0.07 −22.11 p48 55084.257 −1.66 18.50 ± 0.08 −22.09 p48 55107.176 16.55 18.71 ± 0.08 −21.87 p60 55123.143 29.24 18.89 ± 0.09 −21.69 p60 55137.131 40.35 19.07 ± 0.10 −21.52 p60 55138.079 41.11 19.16 ± 0.09 −21.43 p60 55142.106 44.31 19.25 ± 0.10 −21.33 p60 55166.547 63.73 19.75 ± 0.12 −20.84 p60 55168.542 65.31 19.88 ± 0.13 −20.70 p60 55181.505 75.61 20.00 ± 0.16 −20.59 p60

PTF SLSN-I light curves 65

Table D13. PTF 09cwl photometry data.

MJD Phase m Filter Telescope 55021.255 −34.07 20.59 ± 0.27 r p48 55034.210 −24.47 19.83 ± 0.13 r p48 55034.308 −24.40 20.03 ± 0.19 r p48 55050.185 −12.64 19.13 ± 0.12 r p48 55050.268 −12.58 19.21 ± 0.19 r p48 55072.574 3.94 22.04 ± 0.26 UVM2 Swift/UVOT 55072.578 3.94 20.86 ± 0.14 UVW1 Swift/UVOT 55072.581 3.95 19.50 ± 0.09 u Swift/UVOT 55072.583 3.95 22.85 ± 0.33 UVW2 Swift/UVOT 55189.465 90.51 21.72 ± 0.29 r p60 55207.416 103.81 22.28 ± 0.32 g p60 55208.416 104.55 21.57 ± 0.35 r p60 55211.405 106.76 20.76 ± 0.23 g p60 55330.000 194.60 23.93 ± 0.35 r Keck

Table D14. PTF 09cwl rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55021.255 −34.07 20.95 ± 0.27 −20.39 p48 55034.210 −24.47 20.20 ± 0.13 −21.15 p48 55034.308 −24.40 20.40 ± 0.19 −20.95 p48 55050.185 −12.64 19.51 ± 0.12 −21.83 p48 55050.268 −12.58 19.60 ± 0.19 −21.75 p48 55081.227 10.35 19.47 ± 0.10 −21.88 Wise I 55189.465 90.51 22.16 ± 0.29 −19.18 p60 55205.540 102.42 22.42 ± 0.05 −18.92 p200 I 55208.416 104.55 22.02 ± 0.35 −19.32 p60 55330.000 194.60 24.39 ± 0.35 −16.96 Keck

66 De Cia et al.

Table D15. PTF 10aagc photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 55495.481 −3.31 19.88 ± 0.23 r p48 55532.508 27.37 21.44 ± 0.29 r p48 55495.506 −3.29 19.96 ± 0.16 r p48 55534.353 28.90 20.71 ± 0.17 i p60 55495.530 −3.27 19.96 ± 0.18 r p48 55535.315 29.70 20.49 ± 0.33 i p60 55497.524 −1.62 19.87 ± 0.19 r p48 55535.318 29.70 21.55 ± 0.24 r p60 55503.502 3.33 19.60 ± 0.11 r p48 55535.394 29.76 21.37 ± 0.33 r p48 55503.546 3.37 19.68 ± 0.14 r p48 55538.307 32.18 21.58 ± 0.24 i p60 55504.434 4.11 19.54 ± 0.09 r p60 55538.309 32.18 21.86 ± 0.23 r p60 55504.440 4.11 19.47 ± 0.08 r p60 55538.316 32.18 22.50 ± 0.26 g p60 55504.447 4.12 19.64 ± 0.09 r p60 55538.433 32.28 21.40 ± 0.27 r p48 55505.396 4.90 19.70 ± 0.11 i p60 55539.304 33.00 21.32 ± 0.22 i p60 55505.398 4.90 19.62 ± 0.11 i p60 55539.306 33.00 22.11 ± 0.25 r p60 55505.401 4.91 19.19 ± 0.07 g p60 55543.493 36.47 21.29 ± 0.26 r p48 55505.404 4.91 19.32 ± 0.08 g p60 55624.000 103.19 23.65 ± 0.30 r Keck 55505.531 5.01 19.76 ± 0.11 r p48 55506.501 5.82 19.69 ± 0.13 r p48 55506.545 5.85 19.51 ± 0.13 r p48 55507.498 6.64 19.82 ± 0.15 r p48 55507.544 6.68 19.78 ± 0.14 r p48 55508.020 7.08 21.10 ± 0.16 UVM2 Swift/UVOT 55508.027 7.08 20.24 ± 0.13 UVW1 Swift/UVOT 55508.032 7.09 18.95 ± 0.11 u Swift/UVOT 55508.034 7.09 20.95 ± 0.17 UVW2 Swift/UVOT 55513.375 11.51 20.38 ± 0.27 i p60 55513.377 11.52 20.37 ± 0.24 r p60 55513.377 11.52 20.26 ± 0.25 r p48 55513.421 11.55 20.02 ± 0.16 r p48 55514.418 12.38 20.21 ± 0.25 r p48 55515.370 13.17 20.11 ± 0.15 i p60 55515.371 13.17 20.74 ± 0.32 r p48 55515.373 13.17 20.55 ± 0.16 r p60 55515.376 13.17 20.02 ± 0.11 g p60 55515.415 13.21 20.15 ± 0.16 r p48 55516.365 13.99 20.24 ± 0.14 i p60 55516.368 13.99 20.26 ± 0.15 r p60 55516.378 14.00 19.93 ± 0.18 r p48 55516.424 14.04 20.35 ± 0.16 r p48 55517.376 14.83 20.17 ± 0.25 r p48 55517.420 14.87 20.62 ± 0.27 r p48 55518.364 15.65 20.57 ± 0.24 g p60 55518.402 15.68 20.54 ± 0.26 r p48 55518.446 15.72 20.32 ± 0.20 r p48 55519.451 16.55 20.14 ± 0.36 r p48 55530.340 25.57 21.33 ± 0.31 g p60 55532.324 27.22 21.03 ± 0.25 i p60 55532.326 27.22 21.28 ± 0.22 r p60 55532.333 27.23 21.86 ± 0.22 g p60

PTF SLSN-I light curves 67

Table D16. PTF 10aagc rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55495.481 −3.31 20.14 ± 0.23 −19.90 p48 55495.506 −3.29 20.22 ± 0.16 −19.81 p48 55495.530 −3.27 20.22 ± 0.18 −19.81 p48 55497.524 −1.62 20.14 ± 0.19 −19.90 p48 55503.502 3.33 19.88 ± 0.11 −20.16 p48 55503.546 3.37 19.96 ± 0.14 −20.08 p48 55504.434 4.11 19.82 ± 0.09 −20.21 p60 55504.440 4.11 19.76 ± 0.08 −20.28 p60 55504.447 4.12 19.92 ± 0.09 −20.11 p60 55505.531 5.01 20.05 ± 0.11 −19.99 p48 55506.501 5.82 19.98 ± 0.13 −20.06 p48 55506.545 5.85 19.80 ± 0.13 −20.23 p48 55507.498 6.64 20.11 ± 0.15 −19.92 p48 55507.544 6.68 20.07 ± 0.14 −19.97 p48 55513.377 11.52 20.68 ± 0.24 −19.35 p60 55513.377 11.52 20.56 ± 0.25 −19.47 p48 55513.421 11.55 20.33 ± 0.16 −19.70 p48 55514.418 12.38 20.51 ± 0.25 −19.52 p48 55515.371 13.17 21.05 ± 0.32 −18.99 p48 55515.373 13.17 20.86 ± 0.16 −19.18 p60 55515.415 13.21 20.46 ± 0.16 −19.57 p48 55516.368 13.99 20.57 ± 0.15 −19.46 p60 55516.378 14.00 20.24 ± 0.18 −19.80 p48 55516.424 14.04 20.67 ± 0.16 −19.37 p48 55517.376 14.83 20.49 ± 0.25 −19.55 p48 55517.420 14.87 20.94 ± 0.27 −19.10 p48 55518.402 15.68 20.86 ± 0.26 −19.18 p48 55518.446 15.72 20.64 ± 0.20 −19.40 p48 55519.451 16.55 20.46 ± 0.36 −19.58 p48 55532.326 27.22 21.62 ± 0.22 −18.42 p60 55532.508 27.37 21.79 ± 0.29 −18.25 p48 55535.318 29.70 21.90 ± 0.24 −18.14 p60 55535.394 29.76 21.71 ± 0.33 −18.32 p48 55538.309 32.18 22.21 ± 0.23 −17.83 p60 55538.433 32.28 21.75 ± 0.27 −18.29 p48 55539.306 33.00 22.46 ± 0.25 −17.57 p60 55543.493 36.47 21.65 ± 0.26 −18.39 p48 55624.000 103.19 24.08 ± 0.30 −15.96 Keck

68 De Cia et al.

Table D17. PTF 10bfz photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 55227.463 −0.00 18.52 ± 0.09 r p48 55283.303 47.73 20.38 ± 0.29 r p60 55227.507 0.04 18.49 ± 0.08 r p48 55292.501 55.59 21.01 ± 0.36 r p48 55242.264 12.65 18.74 ± 0.06 g p60 55292.502 55.59 20.97 ± 0.34 r p48 55242.266 12.65 18.69 ± 0.06 r p60 55295.494 58.15 20.88 ± 0.21 i p60 55242.267 12.65 18.90 ± 0.08 i p60 55296.146 58.71 21.20 ± 0.26 r p48 55244.452 14.52 18.73 ± 0.07 r p48 55296.189 58.74 21.47 ± 0.25 r p48 55244.496 14.56 18.80 ± 0.07 r p48 55296.452 58.97 21.47 ± 0.31 r p60 55250.437 19.64 19.15 ± 0.09 g p60 55297.237 59.64 21.15 ± 0.22 r p48 55250.438 19.64 18.88 ± 0.08 r p60 55297.321 59.71 22.46 ± 0.35 g p60 55250.440 19.64 18.88 ± 0.08 i p60 55297.330 59.72 21.17 ± 0.19 r p60 55250.442 19.64 19.70 ± 0.17 B p60 55302.474 64.12 21.92 ± 0.30 g p60 55251.464 20.51 18.87 ± 0.07 r p48 55302.483 64.12 20.76 ± 0.22 r p60 55251.510 20.55 18.87 ± 0.11 r p48 55302.485 64.13 20.89 ± 0.22 i p60 55259.240 27.16 19.02 ± 0.12 r p48 55303.333 64.85 21.33 ± 0.17 r p60 55260.407 28.16 19.24 ± 0.08 r p48 55303.335 64.85 21.25 ± 0.27 i p60 55260.451 28.20 19.05 ± 0.08 r p48 55260.539 28.27 19.54 ± 0.16 g p60 55260.540 28.27 19.13 ± 0.09 r p60 55260.542 28.27 18.98 ± 0.08 i p60 55260.545 28.28 20.12 ± 0.27 B p60 55266.465 33.34 19.38 ± 0.09 r p48 55266.511 33.38 19.36 ± 0.10 r p48 55266.534 33.40 20.22 ± 0.14 g p60 55266.536 33.40 19.42 ± 0.09 r p60 55266.538 33.40 19.35 ± 0.09 i p60 55266.541 33.40 20.66 ± 0.30 B p60 55268.376 34.97 19.51 ± 0.08 r p48 55268.420 35.01 19.47 ± 0.09 r p48 55270.268 36.59 19.59 ± 0.14 r p48 55270.311 36.62 19.51 ± 0.10 r p48 55271.226 37.41 20.62 ± 0.19 g p60 55271.229 37.41 19.64 ± 0.13 r p60 55271.230 37.41 19.85 ± 0.17 i p60 55272.255 38.29 19.75 ± 0.11 r p48 55272.298 38.32 19.75 ± 0.10 r p48 55272.481 38.48 20.65 ± 0.15 g p60 55272.484 38.48 19.82 ± 0.10 r p60 55272.486 38.48 19.64 ± 0.11 i p60 55274.380 40.10 19.90 ± 0.12 r p48 55274.424 40.14 19.81 ± 0.12 r p48 55276.422 41.85 20.10 ± 0.13 r p48 55276.483 41.90 19.77 ± 0.28 r p48 55279.162 44.19 20.42 ± 0.31 r p48 55279.206 44.23 20.27 ± 0.23 r p48 55282.335 46.90 21.37 ± 0.21 g p60 55282.336 46.90 20.48 ± 0.16 r p60

PTF SLSN-I light curves 69

Table D18. PTF 10bfz rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55227.463 −0.00 18.72 ± 0.09 −20.84 p48 55227.507 0.04 18.70 ± 0.08 −20.87 p48 55242.266 12.65 18.94 ± 0.06 −20.63 p60 55244.452 14.52 18.98 ± 0.07 −20.58 p48 55244.496 14.56 19.05 ± 0.07 −20.51 p48 55250.438 19.64 19.14 ± 0.08 −20.42 p60 55251.464 20.51 19.14 ± 0.07 −20.42 p48 55251.510 20.55 19.14 ± 0.11 −20.42 p48 55259.240 27.16 19.30 ± 0.12 −20.26 p48 55260.407 28.16 19.52 ± 0.08 −20.04 p48 55260.451 28.20 19.33 ± 0.08 −20.23 p48 55260.540 28.27 19.42 ± 0.09 −20.15 p60 55266.465 33.34 19.68 ± 0.09 −19.88 p48 55266.511 33.38 19.66 ± 0.10 −19.91 p48 55266.536 33.40 19.72 ± 0.09 −19.85 p60 55268.376 34.97 19.81 ± 0.08 −19.75 p48 55268.420 35.01 19.77 ± 0.09 −19.79 p48 55270.268 36.59 19.90 ± 0.14 −19.67 p48 55270.311 36.62 19.82 ± 0.10 −19.74 p48 55271.229 37.41 19.94 ± 0.13 −19.62 p60 55272.255 38.29 20.06 ± 0.11 −19.50 p48 55272.298 38.32 20.06 ± 0.10 −19.51 p48 55272.484 38.48 20.13 ± 0.10 −19.44 p60 55274.380 40.10 20.21 ± 0.12 −19.36 p48 55274.424 40.14 20.12 ± 0.12 −19.44 p48 55276.422 41.85 20.42 ± 0.13 −19.15 p48 55276.483 41.90 20.08 ± 0.28 −19.48 p48 55279.162 44.19 20.74 ± 0.31 −18.82 p48 55279.206 44.23 20.59 ± 0.23 −18.97 p48 55282.336 46.90 20.80 ± 0.16 −18.76 p60 55283.303 47.73 20.71 ± 0.29 −18.85 p60 55292.501 55.59 21.35 ± 0.36 −18.21 p48 55292.502 55.59 21.31 ± 0.34 −18.25 p48 55296.146 58.71 21.54 ± 0.26 −18.03 p48 55296.189 58.74 21.81 ± 0.25 −17.75 p48 55296.452 58.97 21.81 ± 0.31 −17.75 p60 55297.237 59.64 21.49 ± 0.22 −18.07 p48 55297.330 59.72 21.51 ± 0.19 −18.05 p60 55302.483 64.12 21.10 ± 0.22 −18.46 p60 55303.333 64.85 21.68 ± 0.17 −17.88 p60

70 De Cia et al.

Table D19. PTF 10bjp photometry data.

MJD Phase m Filter Telescope 55205.547 −34.57 21.37 ± 0.35 r p48 55207.341 −33.25 21.32 ± 0.30 r p48 55207.386 −33.22 21.65 ± 0.28 r p48 55209.503 −31.66 21.37 ± 0.34 r p48 55209.548 −31.63 21.08 ± 0.28 r p48 55221.515 −22.82 20.77 ± 0.20 r p48 55221.560 −22.79 21.15 ± 0.32 r p48 55227.346 −18.53 20.69 ± 0.34 r p48 55227.391 −18.49 20.46 ± 0.27 r p48 55243.366 −6.74 20.30 ± 0.16 r p48 55243.412 −6.70 20.39 ± 0.17 r p48 55246.213 −4.64 20.59 ± 0.23 r p48 55246.309 −4.57 20.46 ± 0.15 r p48 55246.353 −4.54 20.42 ± 0.20 r p48 55250.405 −1.55 20.51 ± 0.27 r p48 55250.449 −1.52 20.52 ± 0.24 r p48 55271.409 13.91 20.49 ± 0.25 r p48 55275.363 16.82 21.34 ± 0.32 r p48 55275.407 16.85 20.88 ± 0.25 r p48 55284.156 23.29 20.34 ± 0.35 r p48 55296.199 32.16 21.20 ± 0.28 r p48 55297.395 33.04 21.22 ± 0.33 r p48

PTF SLSN-I light curves 71

Table D20. PTF 10bjp rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55205.547 −34.57 21.83 ± 0.35 −19.57 p48 55207.341 −33.25 21.78 ± 0.30 −19.63 p48 55207.386 −33.22 22.10 ± 0.28 −19.30 p48 55209.503 −31.66 21.83 ± 0.34 −19.58 p48 55209.548 −31.63 21.54 ± 0.28 −19.87 p48 55221.515 −22.82 21.23 ± 0.20 −20.17 p48 55221.560 −22.79 21.61 ± 0.32 −19.80 p48 55227.346 −18.53 21.16 ± 0.34 −20.25 p48 55227.391 −18.49 20.93 ± 0.27 −20.48 p48 55243.366 −6.74 20.78 ± 0.16 −20.62 p48 55243.412 −6.70 20.86 ± 0.17 −20.54 p48 55246.213 −4.64 21.07 ± 0.23 −20.33 p48 55246.309 −4.57 20.94 ± 0.15 −20.46 p48 55246.353 −4.54 20.90 ± 0.20 −20.51 p48 55250.405 −1.55 20.99 ± 0.27 −20.42 p48 55250.449 −1.52 21.00 ± 0.24 −20.41 p48 55271.409 13.91 20.98 ± 0.25 −20.42 p48 55275.363 16.82 21.83 ± 0.32 −19.58 p48 55275.407 16.85 21.37 ± 0.25 −20.03 p48 55284.156 23.29 20.84 ± 0.35 −20.57 p48 55296.199 32.16 21.70 ± 0.28 −19.71 p48 55297.395 33.04 21.72 ± 0.33 −19.68 p48

72 De Cia et al.

Table D21. PTF 10cwr photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 55268.233 −10.57 18.69 ± 0.09 r p48 55319.275 30.92 19.49 ± 0.12 r p60 55268.277 −10.53 18.56 ± 0.07 r p48 55360.000 64.03 22.20 ± 0.19 r P200 55271.264 −8.11 18.52 ± 0.09 r p48 55271.315 −8.06 18.53 ± 0.08 r p48 55272.168 −7.37 18.14 ± 0.10 g p60 55272.169 −7.37 18.49 ± 0.09 r p60 55272.170 −7.37 18.68 ± 0.12 i p60 55274.161 −5.75 18.26 ± 0.07 g p60 55274.163 −5.75 18.41 ± 0.08 r p60 55274.164 −5.75 18.81 ± 0.09 i p60 55274.167 −5.75 18.20 ± 0.12 B p60 55276.156 −4.13 18.18 ± 0.07 g p60 55276.157 −4.13 18.51 ± 0.08 r p60 55276.159 −4.13 18.74 ± 0.08 i p60 55276.162 −4.12 18.29 ± 0.13 B p60 55277.344 −3.16 18.12 ± 0.07 g p60 55277.345 −3.16 18.49 ± 0.08 r p60 55277.347 −3.16 18.58 ± 0.08 i p60 55277.348 −3.16 18.99 ± 0.27 z p60 55277.349 −3.16 18.18 ± 0.10 B p60 55280.146 −0.88 18.42 ± 0.19 g p60 55280.147 −0.88 18.31 ± 0.08 r p60 55280.149 −0.88 18.68 ± 0.08 i p60 55280.150 −0.88 18.68 ± 0.34 z p60 55286.211 4.05 18.43 ± 0.08 r p60 55286.213 4.05 18.40 ± 0.08 i p60 55286.215 4.05 18.68 ± 0.27 z p60 55289.217 6.49 18.55 ± 0.19 z p60 55289.221 6.49 18.29 ± 0.11 B p60 55293.228 9.75 18.52 ± 0.12 r p60 55293.230 9.75 18.65 ± 0.10 i p60 55293.233 9.75 18.56 ± 0.13 B p60 55294.271 10.60 18.68 ± 0.15 z p60 55297.175 12.96 18.59 ± 0.07 g p60 55297.177 12.96 18.65 ± 0.08 r p60 55297.181 12.96 18.84 ± 0.09 i p60 55297.182 12.96 18.78 ± 0.13 B p60 55302.207 17.05 19.16 ± 0.27 B p60 55303.207 17.86 18.96 ± 0.08 g p60 55303.211 17.87 18.91 ± 0.09 r p60 55303.212 17.87 19.00 ± 0.09 i p60 55303.213 17.87 19.11 ± 0.30 z p60 55303.214 17.87 19.18 ± 0.15 B p60 55313.246 26.02 19.10 ± 0.09 i p60 55313.252 26.03 19.38 ± 0.10 g p60 55319.274 30.92 19.46 ± 0.11 i p60

PTF SLSN-I light curves 73

Table D22. PTF 10cwr rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55268.233 −10.57 18.97 ± 0.09 −21.33 p48 55268.277 −10.53 18.84 ± 0.07 −21.46 p48 55271.264 −8.11 18.80 ± 0.09 −21.49 p48 55271.315 −8.06 18.82 ± 0.08 −21.48 p48 55272.169 −7.37 18.78 ± 0.09 −21.52 p60 55274.163 −5.75 18.71 ± 0.08 −21.59 p60 55276.157 −4.13 18.81 ± 0.08 −21.49 p60 55277.345 −3.16 18.79 ± 0.08 −21.50 p60 55280.147 −0.88 18.62 ± 0.08 −21.68 p60 55286.211 4.05 18.75 ± 0.08 −21.55 p60 55293.228 9.75 18.85 ± 0.12 −21.44 p60 55297.177 12.96 18.99 ± 0.08 −21.31 p60 55303.211 17.87 19.26 ± 0.09 −21.04 p60 55319.275 30.92 19.87 ± 0.12 −20.43 p60 55360.000 64.03 22.61 ± 0.19 −17.68 P200

74 De Cia et al.

Table D23. PTF 10hgi photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 55320.381 −42.85 21.40 ± 0.34 r p48 55372.277 4.41 17.89 ± 0.08 r p48 55331.441 −32.77 19.10 ± 0.08 r p48 55372.289 4.42 18.15 ± 0.15 i p60 55331.485 −32.73 19.15 ± 0.09 r p48 55372.290 4.42 17.88 ± 0.10 r p60 55332.190 −32.09 19.36 ± 0.18 i p60 55372.295 4.43 18.03 ± 0.13 B p60 55332.192 −32.09 19.15 ± 0.12 r p60 55375.368 7.22 17.94 ± 0.09 r p60 55332.195 −32.09 19.35 ± 0.18 i p60 55375.368 7.22 18.22 ± 0.13 i p60 55332.197 −32.09 19.08 ± 0.12 r p60 55375.370 7.23 18.02 ± 0.13 B p60 55333.220 −31.15 19.32 ± 0.17 i p60 55376.320 8.09 18.15 ± 0.12 i p60 55333.221 −31.15 19.00 ± 0.13 r p60 55376.321 8.09 17.96 ± 0.08 r p60 55336.438 −28.22 18.74 ± 0.08 r p48 55376.322 8.09 18.09 ± 0.12 B p60 55336.482 −28.18 18.81 ± 0.09 r p48 55377.331 9.01 17.94 ± 0.07 r p48 55341.434 −23.67 18.54 ± 0.08 r p48 55387.302 18.09 18.12 ± 0.07 r p48 55341.477 −23.64 18.57 ± 0.08 r p48 55398.237 28.05 18.78 ± 0.09 r p48 55347.195 −18.43 18.33 ± 0.07 r p48 55401.243 30.79 19.06 ± 0.25 i p60 55349.243 −16.56 18.48 ± 0.10 i p60 55401.244 30.79 18.80 ± 0.16 r p60 55349.245 −16.56 18.28 ± 0.08 r p60 55404.276 33.55 19.12 ± 0.11 r p48 55349.246 −16.56 18.23 ± 0.09 B p60 55404.322 33.59 18.91 ± 0.12 r p48 55349.251 −16.56 18.49 ± 0.11 i p60 55405.242 34.43 19.19 ± 0.19 i p60 55349.253 −16.55 18.22 ± 0.08 r p60 55406.183 35.28 19.11 ± 0.12 r p60 55349.266 −16.54 18.33 ± 0.09 B p60 55408.251 37.17 19.30 ± 0.17 i p60 55352.243 −13.83 18.15 ± 0.07 r p48 55410.184 38.93 19.24 ± 0.13 r p48 55352.288 −13.79 18.43 ± 0.09 i p60 55410.227 38.97 19.20 ± 0.11 r p48 55352.289 −13.79 18.14 ± 0.07 r p60 55410.275 39.01 19.00 ± 0.25 r p60 55352.291 −13.79 18.14 ± 0.08 B p60 55410.277 39.01 20.07 ± 0.33 B p60 55355.366 −10.99 18.37 ± 0.09 i p60 55411.295 39.94 19.38 ± 0.19 i p60 55355.367 −10.99 18.09 ± 0.07 r p60 55415.294 43.58 19.28 ± 0.17 i p60 55355.369 −10.99 18.07 ± 0.08 B p60 55415.296 43.58 19.44 ± 0.14 r p60 55356.290 −10.15 18.30 ± 0.09 i p60 55415.297 43.58 20.50 ± 0.30 B p60 55356.292 −10.15 18.09 ± 0.07 r p60 55416.177 44.38 19.36 ± 0.12 r p48 55356.293 −10.14 18.10 ± 0.08 B p60 55416.221 44.42 19.26 ± 0.11 r p48 55357.227 −9.29 18.02 ± 0.07 r p48 55419.182 47.12 19.37 ± 0.12 r p48 55357.282 −9.24 18.03 ± 0.07 r p48 55419.226 47.16 19.36 ± 0.13 r p48 55360.343 −6.46 18.17 ± 0.08 i p60 55421.270 49.02 19.46 ± 0.16 i p60 55360.345 −6.45 17.95 ± 0.07 r p60 55421.272 49.02 19.49 ± 0.15 r p60 55360.346 −6.45 17.99 ± 0.08 B p60 55421.274 49.03 20.48 ± 0.30 B p60 55362.234 −4.73 17.93 ± 0.07 r p48 55422.224 49.89 19.45 ± 0.10 r p48 55363.361 −3.71 18.15 ± 0.09 i p60 55363.365 −3.70 17.94 ± 0.08 B p60 55367.277 −0.14 17.88 ± 0.07 r p48 55367.301 −0.12 18.12 ± 0.10 i p60 55367.302 −0.12 17.90 ± 0.07 r p60 55367.304 −0.12 17.93 ± 0.09 B p60 55367.320 −0.10 17.86 ± 0.07 r p48 55369.358 1.75 18.18 ± 0.12 i p60 55369.359 1.75 17.86 ± 0.08 r p60 55369.380 1.77 17.94 ± 0.09 B p60

PTF SLSN-I light curves 75

Table D24. PTF 10hgi rest-frame g photometry data.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 55320.381 −42.85 21.34 ± 0.34 −16.94 p48 55415.296 43.58 19.67 ± 0.14 −18.61 p60 55331.441 −32.77 19.04 ± 0.08 −19.24 p48 55416.177 44.38 19.58 ± 0.12 −18.69 p48 55331.485 −32.73 19.09 ± 0.09 −19.18 p48 55416.221 44.42 19.48 ± 0.11 −18.79 p48 55332.192 −32.09 19.09 ± 0.12 −19.19 p60 55419.182 47.12 19.60 ± 0.12 −18.67 p48 55332.197 −32.09 19.01 ± 0.12 −19.26 p60 55419.226 47.16 19.60 ± 0.13 −18.68 p48 55333.221 −31.15 18.93 ± 0.13 −19.34 p60 55421.272 49.02 19.73 ± 0.15 −18.55 p60 55334.570 −29.92 18.68 ± 0.07 −19.59 PS1 III 55422.224 49.89 19.69 ± 0.10 −18.58 p48 55336.438 −28.22 18.67 ± 0.08 −19.60 p48 55423.390 50.95 19.68 ± 0.03 −18.59 LT III 55336.482 −28.18 18.74 ± 0.09 −19.53 p48 55426.420 53.71 19.70 ± 0.05 −18.58 LT III 55341.434 −23.67 18.49 ± 0.08 −19.78 p48 55428.870 55.94 19.74 ± 0.07 −18.53 FTN III 55341.477 −23.64 18.52 ± 0.08 −19.75 p48 55429.430 56.45 19.76 ± 0.06 −18.51 LT III 55347.195 −18.43 18.31 ± 0.07 −19.96 p48 55433.380 60.05 19.81 ± 0.05 −18.47 LT III 55349.245 −16.56 18.27 ± 0.08 −20.01 p60 55436.400 62.80 19.88 ± 0.12 −18.39 LT III 55349.253 −16.55 18.21 ± 0.08 −20.06 p60 55439.820 65.91 19.95 ± 0.04 −18.32 FTN III 55352.243 −13.83 18.15 ± 0.07 −20.12 p48 55441.370 67.33 19.96 ± 0.04 −18.31 LT III 55352.289 −13.79 18.15 ± 0.07 −20.12 p60 55445.370 70.97 20.02 ± 0.04 −18.26 LT III 55355.367 −10.99 18.11 ± 0.07 −20.16 p60 55447.800 73.18 20.05 ± 0.04 −18.22 FTN III 55356.292 −10.15 18.11 ± 0.07 −20.16 p60 55448.380 73.71 20.10 ± 0.04 −18.17 LT III 55357.227 −9.29 18.06 ± 0.07 −20.22 p48 55453.770 78.62 20.20 ± 0.05 −18.07 FTN III 55357.282 −9.24 18.06 ± 0.07 −20.21 p48 55460.360 84.62 20.36 ± 0.09 −17.92 LT III 55360.345 −6.45 17.99 ± 0.07 −20.28 p60 55616.230 226.55 24.06 ± 0.30 −14.22 WHT III 55362.234 −4.73 17.98 ± 0.07 −20.30 p48 55366.450 −0.90 17.96 ± 0.10 −20.32 PS1 III 55367.277 −0.14 17.96 ± 0.07 −20.32 p48 55367.302 −0.12 17.98 ± 0.07 −20.30 p60 55367.320 −0.10 17.94 ± 0.07 −20.34 p48 55369.359 1.75 17.94 ± 0.08 −20.33 p60 55372.277 4.41 17.98 ± 0.08 −20.29 p48 55372.290 4.42 17.97 ± 0.10 −20.30 p60 55375.368 7.22 18.04 ± 0.09 −20.23 p60 55376.321 8.09 18.07 ± 0.08 −20.21 p60 55377.331 9.01 18.06 ± 0.07 −20.22 p48 55387.302 18.09 18.27 ± 0.07 −20.01 p48 55395.390 25.46 18.65 ± 0.08 −19.63 LT III 55398.237 28.05 18.96 ± 0.09 −19.32 p48 55398.470 28.26 18.91 ± 0.09 −19.37 LT III 55401.244 30.79 18.99 ± 0.16 −19.28 p60 55401.500 31.02 19.15 ± 0.09 −19.13 LT III 55404.276 33.55 19.32 ± 0.11 −18.95 p48 55404.322 33.59 19.10 ± 0.12 −19.17 p48 55405.390 34.56 19.22 ± 0.06 −19.06 LT III 55406.183 35.28 19.31 ± 0.12 −18.97 p60 55409.400 38.21 19.35 ± 0.03 −18.93 LT III 55410.184 38.93 19.45 ± 0.13 −18.82 p48 55410.227 38.97 19.41 ± 0.11 −18.86 p48 55410.275 39.01 19.21 ± 0.25 −19.07 p60

76 De Cia et al.

Table D25. PTF 10nmn photometry data.

MJD Phase m Filter Telescope 55267.413 −103.94 19.79 ± 0.14 r p48 55267.456 −103.90 19.70 ± 0.12 r p48 55384.200 0.00 18.54 ± 0.07 r p48 55384.245 0.04 18.52 ± 0.07 r p48 55391.275 6.30 18.72 ± 0.15 i p60 55391.277 6.30 18.67 ± 0.08 r p60 55392.213 7.13 18.63 ± 0.14 i p60 55392.215 7.13 18.69 ± 0.08 r p60 55392.217 7.14 19.12 ± 0.19 B p60 55392.220 7.14 19.40 ± 0.10 g p60 55404.163 17.77 18.99 ± 0.23 i p60 55404.165 17.77 19.15 ± 0.12 r p60 55569.533 164.95 20.09 ± 0.35 i p60 55569.535 164.95 20.99 ± 0.26 r p60 55571.530 166.72 20.76 ± 0.26 r p60 55571.542 166.73 21.43 ± 0.34 g p60 55573.525 168.50 20.82 ± 0.25 r p60 55573.537 168.51 21.53 ± 0.32 g p60 55577.547 172.08 21.10 ± 0.28 r p60 55577.551 172.08 21.35 ± 0.27 g p60 55585.491 179.15 20.08 ± 0.34 i p60 55585.502 179.16 21.03 ± 0.30 r p60 55591.474 184.47 21.22 ± 0.28 r p60 55596.461 188.91 21.10 ± 0.27 r p60 55596.474 188.92 21.83 ± 0.34 g p60 55599.499 191.62 21.93 ± 0.35 g p60 55604.440 196.01 21.31 ± 0.29 r p60 55605.438 196.90 21.22 ± 0.32 r p60 55605.451 196.91 21.78 ± 0.34 g p60 55614.507 204.97 21.21 ± 0.35 r p60 55621.393 211.10 21.14 ± 0.25 r p60 55621.416 211.12 21.54 ± 0.27 g p60 55622.389 211.99 21.31 ± 0.30 r p60 55622.402 212.00 21.83 ± 0.34 g p60 55629.383 218.21 21.16 ± 0.33 r p60 55630.368 219.09 21.07 ± 0.26 r p60 55631.380 219.99 21.80 ± 0.34 g p60 55632.363 220.86 21.22 ± 0.33 r p60 55649.350 235.98 21.27 ± 0.26 r p60 55656.296 242.17 20.24 ± 0.35 i p60 55656.312 242.18 21.65 ± 0.35 r p60 56188.500 715.82 25.25 ± 0.15 r HST

PTF SLSN-I light curves 77

Table D26. PTF 10nmn rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55267.413 −103.94 19.77 ± 0.14 −19.04 p48 55267.456 −103.90 19.68 ± 0.12 −19.13 p48 55384.200 0.00 18.65 ± 0.07 −20.16 p48 55384.245 0.04 18.63 ± 0.07 −20.18 p48 55391.277 6.30 18.81 ± 0.08 −20.00 p60 55392.215 7.13 18.83 ± 0.08 −19.98 p60 55404.165 17.77 19.33 ± 0.12 −19.48 p60 55569.535 164.95 21.32 ± 0.26 −17.49 p60 55571.530 166.72 21.09 ± 0.26 −17.72 p60 55573.525 168.50 21.15 ± 0.25 −17.66 p60 55577.547 172.08 21.42 ± 0.28 −17.38 p60 55585.502 179.16 21.35 ± 0.30 −17.46 p60 55591.474 184.47 21.54 ± 0.28 −17.27 p60 55596.461 188.91 21.42 ± 0.27 −17.39 p60 55604.440 196.01 21.63 ± 0.29 −17.18 p60 55605.438 196.90 21.53 ± 0.32 −17.27 p60 55614.507 204.97 21.52 ± 0.35 −17.29 p60 55621.393 211.10 21.44 ± 0.25 −17.37 p60 55622.389 211.99 21.61 ± 0.30 −17.20 p60 55629.383 218.21 21.46 ± 0.33 −17.35 p60 55630.368 219.09 21.37 ± 0.26 −17.44 p60 55632.363 220.86 21.52 ± 0.33 −17.29 p60 55649.350 235.98 21.56 ± 0.26 −17.25 p60 55656.312 242.18 21.94 ± 0.35 −16.87 p60 56188.500 715.82 25.58 ± 0.15 −13.23 HST

78 De Cia et al.

Table D27. PTF 10uhf photometry data.

MJD Phase m Filter Telescope 55433.249 −14.75 20.75 ± 0.36 r p48 55436.275 −12.40 20.38 ± 0.25 r p48 55436.319 −12.37 20.34 ± 0.28 r p48 55444.149 −6.29 20.14 ± 0.15 r p48 55444.196 −6.25 20.22 ± 0.17 r p48 55447.135 −3.97 20.45 ± 0.32 r p60 55447.136 −3.97 20.12 ± 0.26 g p60 55448.900 −2.60 19.76 ± 0.08 g LT 55448.900 −2.60 19.78 ± 0.10 i LT 55448.900 −2.60 19.74 ± 0.09 r LT 55450.900 −1.05 19.81 ± 0.10 i LT 55450.900 −1.05 19.78 ± 0.08 g LT 55450.900 −1.05 19.78 ± 0.09 r LT 55453.149 0.70 20.10 ± 0.15 r p48 55453.193 0.73 19.90 ± 0.14 r p48 55457.136 3.79 20.00 ± 0.16 r p48 55457.179 3.83 20.09 ± 0.18 r p48 55459.800 5.86 19.83 ± 0.10 r LT 55459.800 5.86 19.96 ± 0.11 g LT 55460.138 6.12 20.19 ± 0.19 r p48 55460.196 6.17 20.19 ± 0.21 r p48 55485.900 26.13 21.54 ± 0.22 g LT 55485.900 26.13 20.82 ± 0.16 r LT 55485.900 26.13 20.57 ± 0.15 i LT

Table D28. PTF 10uhf rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55433.249 −14.75 21.11 ± 0.36 −19.74 p48 55436.275 −12.40 20.75 ± 0.25 −20.10 p48 55436.319 −12.37 20.71 ± 0.28 −20.14 p48 55444.149 −6.29 20.52 ± 0.15 −20.33 p48 55444.196 −6.25 20.61 ± 0.17 −20.24 p48 55447.135 −3.97 20.84 ± 0.32 −20.01 p60 55448.900 −2.60 20.12 ± 0.09 −20.73 LT 55450.900 −1.05 20.17 ± 0.09 −20.69 LT 55453.149 0.70 20.50 ± 0.15 −20.35 p48 55453.193 0.73 20.30 ± 0.14 −20.55 p48 55457.136 3.79 20.41 ± 0.16 −20.45 p48 55457.179 3.83 20.50 ± 0.18 −20.36 p48 55459.800 5.86 20.23 ± 0.10 −20.62 LT 55460.138 6.12 20.61 ± 0.19 −20.25 p48 55460.196 6.17 20.61 ± 0.21 −20.24 p48 55485.900 26.13 21.27 ± 0.16 −19.59 LT

PTF SLSN-I light curves 79

Table D29. PTF 10vqv photometry data.

MJD Phase m Filter Telescope 55455.517 −10.33 20.02 ± 0.12 r p48 55456.498 −9.65 20.02 ± 0.10 r p48 55457.502 −8.96 20.06 ± 0.10 r p48 55458.295 −8.42 20.23 ± 0.18 r p60 55458.296 −8.42 19.68 ± 0.14 g p60 55459.293 −7.73 20.21 ± 0.20 r p60 55459.518 −7.57 19.91 ± 0.15 r p48 55460.291 −7.04 19.97 ± 0.14 r p60 55460.364 −6.99 19.81 ± 0.16 r p48 55460.407 −6.96 20.00 ± 0.17 r p48 55463.401 −4.90 19.93 ± 0.17 r p48 55463.444 −4.87 20.09 ± 0.26 r p48 55473.486 2.05 19.86 ± 0.12 r p48 55473.529 2.08 19.87 ± 0.15 r p48 55478.496 5.50 19.91 ± 0.14 r p48 55479.334 6.07 19.86 ± 0.17 r p48 55479.377 6.10 19.98 ± 0.14 r p48 55482.429 8.20 20.06 ± 0.12 r p48 55544.087 50.67 21.57 ± 0.28 r p60 55544.095 50.67 21.46 ± 0.27 r p60 55562.114 63.08 21.72 ± 0.31 r p60 55566.151 65.86 22.14 ± 0.33 r p60 55567.133 66.54 22.03 ± 0.28 r p60 55571.203 69.34 21.57 ± 0.33 g p60 55590.136 82.38 22.41 ± 0.24 g p60 55591.128 83.07 22.14 ± 0.29 r p60 55599.126 88.57 22.19 ± 0.34 r p60 55599.130 88.58 22.67 ± 0.31 g p60

80 De Cia et al.

Table D30. PTF 10vqv rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55455.517 −10.33 20.57 ± 0.12 −21.43 p48 55456.498 −9.65 20.57 ± 0.10 −21.43 p48 55457.502 −8.96 20.61 ± 0.10 −21.39 p48 55458.295 −8.42 20.78 ± 0.18 −21.22 p60 55459.293 −7.73 20.76 ± 0.20 −21.24 p60 55459.518 −7.57 20.46 ± 0.15 −21.54 p48 55460.291 −7.04 20.52 ± 0.14 −21.48 p60 55460.364 −6.99 20.36 ± 0.16 −21.64 p48 55460.407 −6.96 20.55 ± 0.17 −21.45 p48 55463.401 −4.90 20.48 ± 0.17 −21.52 p48 55463.444 −4.87 20.63 ± 0.26 −21.37 p48 55473.486 2.05 20.40 ± 0.12 −21.60 p48 55473.529 2.08 20.41 ± 0.15 −21.58 p48 55478.496 5.50 20.45 ± 0.14 −21.55 p48 55479.334 6.07 20.40 ± 0.17 −21.60 p48 55479.377 6.10 20.51 ± 0.14 −21.49 p48 55482.429 8.20 20.60 ± 0.12 −21.40 p48 55544.087 50.67 22.08 ± 0.28 −19.92 p60 55544.095 50.67 21.97 ± 0.27 −20.03 p60 55562.114 63.08 22.22 ± 0.31 −19.78 p60 55566.151 65.86 22.64 ± 0.33 −19.36 p60 55567.133 66.54 22.54 ± 0.28 −19.46 p60 55591.128 83.07 22.64 ± 0.29 −19.36 p60 55599.126 88.57 22.68 ± 0.34 −19.31 p60

PTF SLSN-I light curves 81

Table D31. PTF 10vwg photometry data.

MJD Phase m Filter Telescope 55400.401 −46.12 19.46 ± 0.32 r p48 55401.359 −45.32 19.11 ± 0.35 r p48 55401.403 −45.28 19.30 ± 0.34 r p48 55425.290 −25.21 18.40 ± 0.09 r p48 55427.211 −23.59 18.56 ± 0.11 r p48 55427.261 −23.55 18.34 ± 0.10 r p48 55428.257 −22.71 18.34 ± 0.10 r p48 55428.300 −22.68 17.84 ± 0.12 r p48 55430.180 −21.10 18.37 ± 0.14 r p48 55430.242 −21.05 18.31 ± 0.11 r p48 55431.246 −20.20 18.27 ± 0.11 r p48 55431.290 −20.17 18.23 ± 0.12 r p48 55433.160 −18.59 18.20 ± 0.11 r p48 55433.207 −18.55 18.31 ± 0.12 r p48 55434.247 −17.68 18.37 ± 0.10 r p48 55434.290 −17.64 18.25 ± 0.12 r p48 55435.252 −16.84 17.78 ± 0.26 r p48 55435.296 −16.80 17.79 ± 0.14 r p48 55436.268 −15.98 17.79 ± 0.11 r p48 55436.320 −15.94 17.77 ± 0.12 r p48 55446.151 −7.68 17.64 ± 0.09 r p48 55450.149 −4.32 17.67 ± 0.08 r p48 55450.192 −4.28 17.61 ± 0.09 r p48 55451.155 −3.47 17.81 ± 0.09 r p48 55451.199 −3.44 17.74 ± 0.09 r p48 55499.800 37.40 19.97 ± 0.13 r LT 55499.800 37.40 20.02 ± 0.13 r LT 55499.800 37.40 19.57 ± 0.11 i LT 55499.800 37.40 19.56 ± 0.13 i LT 55513.129 48.60 21.24 ± 0.35 B p60 55514.078 49.40 19.51 ± 0.31 r p48 55514.121 49.43 19.27 ± 0.28 r p48 55515.078 50.24 19.04 ± 0.28 r p48 55517.119 51.95 19.02 ± 0.25 r p48 55605.300 126.05 20.14 ± 0.18 i LT 55605.300 126.05 20.80 ± 0.20 r LT 55605.300 126.05 20.62 ± 0.19 r LT 55605.300 126.05 20.11 ± 0.18 i LT 55643.200 157.90 21.19 ± 0.30 r LT 55643.200 157.90 21.13 ± 0.29 r LT 55644.200 158.74 20.31 ± 0.19 i LT 55644.200 158.74 20.69 ± 0.24 r LT 55644.200 158.74 21.12 ± 0.28 r LT 55684.440 192.55 20.97 ± 0.27 i p60 55706.000 210.66 21.77 ± 0.20 r P200

82 De Cia et al.

Table D32. PTF 10vwg rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55400.401 −46.12 19.61 ± 0.32 −20.22 p48 55401.359 −45.32 19.26 ± 0.35 −20.58 p48 55401.403 −45.28 19.45 ± 0.34 −20.39 p48 55425.290 −25.21 18.55 ± 0.09 −21.29 p48 55427.211 −23.59 18.71 ± 0.11 −21.12 p48 55427.261 −23.55 18.49 ± 0.10 −21.34 p48 55428.257 −22.71 18.50 ± 0.10 −21.34 p48 55428.300 −22.68 17.99 ± 0.12 −21.84 p48 55430.180 −21.10 18.53 ± 0.14 −21.30 p48 55430.242 −21.05 18.48 ± 0.11 −21.36 p48 55431.246 −20.20 18.43 ± 0.11 −21.40 p48 55431.290 −20.17 18.40 ± 0.12 −21.43 p48 55433.160 −18.59 18.37 ± 0.11 −21.46 p48 55433.207 −18.55 18.48 ± 0.12 −21.35 p48 55434.247 −17.68 18.55 ± 0.10 −21.28 p48 55434.290 −17.64 18.42 ± 0.12 −21.41 p48 55435.252 −16.84 17.96 ± 0.26 −21.88 p48 55435.296 −16.80 17.97 ± 0.14 −21.87 p48 55436.268 −15.98 17.97 ± 0.11 −21.86 p48 55436.320 −15.94 17.95 ± 0.12 −21.88 p48 55446.151 −7.68 17.85 ± 0.09 −21.98 p48 55450.149 −4.32 17.89 ± 0.08 −21.94 p48 55450.192 −4.28 17.83 ± 0.09 −22.00 p48 55451.155 −3.47 18.03 ± 0.09 −21.80 p48 55451.199 −3.44 17.96 ± 0.09 −21.87 p48 55499.800 37.40 20.30 ± 0.13 −19.53 LT 55499.800 37.40 20.35 ± 0.13 −19.48 LT 55514.078 49.40 19.86 ± 0.31 −19.97 p48 55514.121 49.43 19.63 ± 0.28 −20.20 p48 55515.078 50.24 19.39 ± 0.28 −20.44 p48 55517.119 51.95 19.38 ± 0.25 −20.45 p48 55605.300 126.05 21.20 ± 0.20 −18.64 LT 55605.300 126.05 21.02 ± 0.19 −18.82 LT 55643.200 157.90 21.58 ± 0.30 −18.26 LT 55643.200 157.90 21.52 ± 0.29 −18.32 LT 55644.200 158.74 21.08 ± 0.24 −18.76 LT 55644.200 158.74 21.50 ± 0.28 −18.33 LT 55706.000 210.66 22.12 ± 0.20 −17.71 P200

PTF SLSN-I light curves 83

Table D33. PTF 11dij photometry data.

MJD Phase m Filter Telescope 55652.370 −28.00 20.01 ± 0.11 r p48 55652.429 −27.95 19.85 ± 0.11 r p48 55666.197 −15.90 18.08 ± 0.08 r p48 55666.240 −15.86 18.04 ± 0.07 r p48 55694.324 8.71 17.95 ± 0.06 r p60 55694.327 8.71 17.83 ± 0.06 g p60 55694.329 8.71 18.05 ± 0.06 i p60 55694.330 8.71 17.90 ± 0.06 r p60 55694.334 8.72 17.98 ± 0.06 g p60 55695.205 9.48 17.89 ± 0.08 r p48 55695.249 9.52 17.96 ± 0.07 r p48 55708.423 21.04 18.42 ± 0.09 i p60 55708.425 21.05 18.42 ± 0.08 r p60 55713.378 25.38 18.88 ± 0.11 g p60 55744.294 52.43 20.32 ± 0.14 i p60 55744.296 52.43 20.68 ± 0.15 r p60 55744.299 52.43 21.30 ± 0.20 g p60 55754.299 61.18 21.02 ± 0.17 i p60 55754.301 61.19 21.55 ± 0.19 r p60 55755.301 62.06 20.68 ± 0.17 i p60 55766.273 71.66 21.00 ± 0.24 i p60 55779.196 82.97 21.72 ± 0.24 i p60

84 De Cia et al.

Table D34. PTF 11dij rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 55652.370 −28.00 19.98 ± 0.11 −19.17 p48 55652.429 −27.95 19.82 ± 0.11 −19.33 p48 55653.570 −26.95 19.29 ± 0.05 −19.86 PS1 III 55653.580 −26.94 19.30 ± 0.05 −19.85 PS1 III 55666.197 −15.90 18.11 ± 0.08 −21.05 p48 55666.240 −15.86 18.06 ± 0.07 −21.09 p48 55666.800 −15.37 17.94 ± 0.06 −21.21 PS1 III 55694.324 8.71 18.08 ± 0.06 −21.07 p60 55694.330 8.71 18.02 ± 0.06 −21.13 p60 55694.990 9.29 17.95 ± 0.06 −21.20 LT III 55695.205 9.48 18.02 ± 0.08 −21.13 p48 55695.249 9.52 18.08 ± 0.07 −21.07 p48 55695.540 9.77 17.96 ± 0.02 −21.19 FTN III 55695.920 10.10 18.05 ± 0.10 −21.10 LT III 55695.950 10.13 18.06 ± 0.04 −21.09 LT III 55696.930 10.99 18.05 ± 0.06 −21.10 LT III 55697.960 11.89 18.12 ± 0.06 −21.03 LT III 55698.360 12.24 18.11 ± 0.06 −21.04 FTN III 55698.950 12.76 18.10 ± 0.03 −21.05 LT III 55700.050 13.72 18.15 ± 0.08 −21.00 LT III 55700.940 14.50 18.23 ± 0.02 −20.92 LT III 55702.030 15.45 18.25 ± 0.02 −20.90 LT III 55702.970 16.27 18.28 ± 0.02 −20.87 LT III 55703.930 17.11 18.36 ± 0.03 −20.79 LT III 55704.930 17.99 18.40 ± 0.02 −20.76 LT III 55708.425 21.05 18.58 ± 0.08 −20.57 p60 55710.290 22.68 18.59 ± 0.02 −20.56 FTN III 55712.940 25.00 18.69 ± 0.02 −20.47 LT III 55715.930 27.61 18.86 ± 0.02 −20.29 LT III 55721.930 32.86 19.20 ± 0.04 −19.96 LT III 55736.750 45.83 19.94 ± 0.04 −19.21 NTT III 55744.296 52.43 20.91 ± 0.15 −18.24 p60 55745.330 53.34 20.57 ± 0.07 −18.58 FTN III 55751.930 59.11 21.15 ± 0.30 −18.00 LT III 55754.301 61.19 21.80 ± 0.19 −17.35 p60 55765.940 71.37 21.43 ± 0.06 −17.72 LT III 55766.890 72.20 21.45 ± 0.07 −17.70 LT III 55767.900 73.09 21.49 ± 0.06 −17.66 LT III 55776.890 80.95 21.66 ± 0.10 −17.49 LT III 55917.740 204.19 23.31 ± 0.24 −15.85 WHT III

PTF SLSN-I light curves 85

Table D35. PTF 11hrq photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 55753.477 0.00 17.21 ± 0.07 r p48 55820.294 63.21 18.07 ± 0.10 r p48 55754.486 0.95 17.23 ± 0.07 r p48 55820.338 63.25 18.25 ± 0.09 r p48 55755.474 1.89 17.25 ± 0.07 r p48 55821.324 64.18 18.15 ± 0.09 r p48 55757.473 3.78 17.37 ± 0.09 r p48 55822.289 65.10 18.27 ± 0.09 r p48 55761.458 7.55 17.43 ± 0.08 r p48 55822.332 65.14 18.22 ± 0.09 r p48 55762.492 8.53 17.47 ± 0.07 r p48 55823.301 66.05 18.31 ± 0.08 r p48 55763.451 9.44 17.50 ± 0.07 r p48 55823.345 66.09 18.25 ± 0.07 r p48 55764.454 10.38 17.48 ± 0.07 r p48 55824.379 67.07 18.30 ± 0.08 r p48 55765.468 11.34 17.44 ± 0.07 r p48 55842.266 83.99 18.60 ± 0.15 r p48 55766.439 12.26 17.52 ± 0.07 r p48 55842.309 84.03 18.73 ± 0.16 r p48 55768.454 14.17 17.52 ± 0.07 r p48 55843.265 84.94 18.66 ± 0.19 r p48 55769.453 15.11 17.57 ± 0.07 r p48 55843.308 84.98 18.61 ± 0.15 r p48 55769.496 15.15 17.58 ± 0.07 r p48 55844.227 85.85 18.74 ± 0.19 r p48 55770.445 16.05 17.56 ± 0.07 r p48 55849.258 90.61 18.59 ± 0.09 r p48 55770.489 16.09 17.58 ± 0.07 r p48 55850.215 91.51 18.62 ± 0.11 r p48 55771.441 16.99 17.62 ± 0.06 r p48 55850.272 91.57 18.64 ± 0.11 r p48 55771.487 17.04 17.59 ± 0.06 r p48 55851.209 92.45 18.67 ± 0.12 r p48 55774.445 19.84 17.61 ± 0.07 r p48 55851.254 92.50 18.64 ± 0.10 r p48 55779.425 24.55 17.66 ± 0.07 r p48 55852.206 93.40 18.67 ± 0.08 r p48 55779.489 24.61 17.69 ± 0.06 r p48 55853.203 94.34 18.63 ± 0.10 r p48 55780.407 25.48 17.72 ± 0.07 r p48 55853.247 94.38 18.64 ± 0.09 r p48 55780.465 25.53 17.68 ± 0.06 r p48 55854.206 95.29 18.61 ± 0.08 r p48 55782.395 27.36 17.73 ± 0.06 r p48 55854.252 95.33 18.64 ± 0.08 r p48 55783.398 28.31 17.77 ± 0.09 r p48 55866.166 106.60 19.00 ± 0.12 r p48 55783.441 28.35 17.73 ± 0.07 r p48 55866.210 106.64 19.13 ± 0.13 r p48 55784.424 29.28 17.74 ± 0.09 r p48 55867.163 107.55 19.50 ± 0.28 r p48 55784.468 29.32 17.73 ± 0.07 r p48 55867.207 107.59 19.11 ± 0.17 r p48 55789.376 33.96 17.78 ± 0.11 r p48 55868.160 108.49 19.23 ± 0.19 r p48 55789.435 34.02 17.86 ± 0.10 r p48 55868.204 108.53 19.25 ± 0.13 r p48 55790.416 34.94 17.82 ± 0.07 r p48 55874.190 114.19 18.94 ± 0.25 r p48 55790.459 34.98 17.83 ± 0.07 r p48 55884.116 123.58 19.26 ± 0.16 r p48 55791.383 35.86 17.84 ± 0.10 r p48 55884.160 123.62 19.20 ± 0.19 r p48 55791.431 35.90 17.88 ± 0.08 r p48 55887.163 126.47 19.37 ± 0.14 r p48 55792.369 36.79 17.79 ± 0.08 r p48 55887.218 126.52 19.31 ± 0.13 r p48 55792.413 36.83 17.88 ± 0.09 r p48 55889.111 128.31 19.48 ± 0.15 r p48 55793.382 37.75 17.91 ± 0.07 r p48 55889.112 128.31 19.42 ± 0.14 r p48 55793.457 37.82 17.88 ± 0.07 r p48 55891.146 130.23 19.16 ± 0.13 r p48 55794.410 38.72 17.85 ± 0.07 r p48 55892.138 131.17 18.95 ± 0.21 r p48 55811.354 54.75 17.95 ± 0.08 r p48 55893.094 132.08 19.19 ± 0.15 r p48 55811.398 54.79 17.95 ± 0.07 r p48 55893.130 132.11 19.58 ± 0.18 r p48 55812.421 55.76 18.00 ± 0.09 r p48 55894.113 133.04 18.94 ± 0.34 r p48 55813.326 56.62 17.99 ± 0.09 r p48 55894.165 133.09 19.10 ± 0.22 r p48 55817.388 60.46 18.33 ± 0.19 r p48 55895.095 133.97 19.19 ± 0.13 r p48 55818.297 61.32 18.09 ± 0.16 r p48 55895.139 134.01 18.85 ± 0.25 r p48 55818.343 61.36 18.15 ± 0.16 r p48 55896.103 134.92 19.43 ± 0.24 r p48 55819.386 62.35 17.95 ± 0.14 r p48 55899.097 137.75 18.93 ± 0.26 r p48

86 De Cia et al.

Table D36. Continuation of Table D35. MJD Phase m Filter Telescope 55901.130 139.68 18.96 ± 0.28 r p48 55902.093 140.59 18.94 ± 0.24 r p48 55902.138 140.63 19.21 ± 0.22 r p48 55903.088 141.53 19.64 ± 0.25 r p48 55903.114 141.55 19.21 ± 0.18 r p48 55904.100 142.49 19.47 ± 0.27 r p48 55904.146 142.53 19.30 ± 0.27 r p48 55906.147 144.42 19.62 ± 0.17 r p48 55916.115 153.85 19.46 ± 0.15 r p48 55916.167 153.90 19.33 ± 0.20 r p48

PTF SLSN-I light curves 87

Table D37. PTF 11hrq rest-frame g photometry data.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 55753.477 0.00 17.17 ± 0.07 −19.87 p48 55820.294 63.21 18.22 ± 0.10 −18.82 p48 55754.486 0.95 17.19 ± 0.07 −19.84 p48 55820.338 63.25 18.40 ± 0.09 −18.63 p48 55755.474 1.89 17.21 ± 0.07 −19.82 p48 55821.324 64.18 18.31 ± 0.09 −18.73 p48 55757.473 3.78 17.35 ± 0.09 −19.69 p48 55822.289 65.10 18.43 ± 0.09 −18.61 p48 55761.458 7.55 17.42 ± 0.08 −19.62 p48 55822.332 65.14 18.37 ± 0.09 −18.66 p48 55762.492 8.53 17.46 ± 0.07 −19.57 p48 55823.301 66.05 18.46 ± 0.08 −18.57 p48 55763.451 9.44 17.49 ± 0.07 −19.54 p48 55823.345 66.09 18.41 ± 0.07 −18.62 p48 55764.454 10.38 17.48 ± 0.07 −19.55 p48 55824.379 67.07 18.46 ± 0.08 −18.58 p48 55765.468 11.34 17.44 ± 0.07 −19.59 p48 55842.266 83.99 18.78 ± 0.15 −18.25 p48 55766.439 12.26 17.53 ± 0.07 −19.50 p48 55842.309 84.03 18.92 ± 0.16 −18.12 p48 55768.454 14.17 17.54 ± 0.07 −19.50 p48 55843.265 84.94 18.85 ± 0.19 −18.19 p48 55769.453 15.11 17.59 ± 0.07 −19.45 p48 55843.308 84.98 18.79 ± 0.15 −18.24 p48 55769.496 15.15 17.59 ± 0.07 −19.44 p48 55844.227 85.85 18.93 ± 0.19 −18.11 p48 55770.445 16.05 17.58 ± 0.07 −19.46 p48 55849.258 90.61 18.79 ± 0.09 −18.25 p48 55770.489 16.09 17.60 ± 0.07 −19.44 p48 55850.215 91.51 18.81 ± 0.11 −18.22 p48 55771.441 16.99 17.64 ± 0.06 −19.39 p48 55850.272 91.57 18.84 ± 0.11 −18.20 p48 55771.487 17.04 17.62 ± 0.06 −19.42 p48 55851.209 92.45 18.87 ± 0.12 −18.17 p48 55774.445 19.84 17.64 ± 0.07 −19.39 p48 55851.254 92.50 18.84 ± 0.10 −18.20 p48 55779.425 24.55 17.71 ± 0.07 −19.32 p48 55852.206 93.40 18.86 ± 0.08 −18.17 p48 55779.489 24.61 17.74 ± 0.06 −19.30 p48 55853.203 94.34 18.82 ± 0.10 −18.21 p48 55780.407 25.48 17.77 ± 0.07 −19.27 p48 55853.247 94.38 18.84 ± 0.09 −18.19 p48 55780.465 25.53 17.74 ± 0.06 −19.30 p48 55854.206 95.29 18.81 ± 0.08 −18.22 p48 55782.395 27.36 17.79 ± 0.06 −19.25 p48 55854.252 95.33 18.83 ± 0.08 −18.20 p48 55783.398 28.31 17.83 ± 0.09 −19.20 p48 55866.166 106.60 19.21 ± 0.12 −17.82 p48 55783.441 28.35 17.79 ± 0.07 −19.24 p48 55866.210 106.64 19.34 ± 0.13 −17.69 p48 55784.424 29.28 17.81 ± 0.09 −19.23 p48 55867.163 107.55 19.71 ± 0.28 −17.33 p48 55784.468 29.32 17.80 ± 0.07 −19.23 p48 55867.207 107.59 19.32 ± 0.17 −17.71 p48 55789.376 33.96 17.86 ± 0.11 −19.17 p48 55868.160 108.49 19.44 ± 0.19 −17.59 p48 55789.435 34.02 17.94 ± 0.10 −19.09 p48 55868.204 108.53 19.46 ± 0.13 −17.58 p48 55790.416 34.94 17.90 ± 0.07 −19.13 p48 55874.190 114.19 19.15 ± 0.25 −17.89 p48 55790.459 34.98 17.91 ± 0.07 −19.12 p48 55884.116 123.58 19.48 ± 0.16 −17.56 p48 55791.383 35.86 17.93 ± 0.10 −19.11 p48 55884.160 123.62 19.41 ± 0.19 −17.62 p48 55791.431 35.90 17.97 ± 0.08 −19.06 p48 55887.163 126.47 19.59 ± 0.14 −17.45 p48 55792.369 36.79 17.88 ± 0.08 −19.15 p48 55887.218 126.52 19.53 ± 0.13 −17.50 p48 55792.413 36.83 17.96 ± 0.09 −19.07 p48 55889.111 128.31 19.69 ± 0.15 −17.34 p48 55793.382 37.75 18.00 ± 0.07 −19.03 p48 55889.112 128.31 19.64 ± 0.14 −17.39 p48 55793.457 37.82 17.97 ± 0.07 −19.06 p48 55891.146 130.23 19.38 ± 0.13 −17.65 p48 55794.410 38.72 17.95 ± 0.07 −19.09 p48 55892.138 131.17 19.17 ± 0.21 −17.86 p48 55811.354 54.75 18.08 ± 0.08 −18.95 p48 55893.094 132.08 19.41 ± 0.15 −17.62 p48 55811.398 54.79 18.09 ± 0.07 −18.95 p48 55893.130 132.11 19.80 ± 0.18 −17.23 p48 55812.421 55.76 18.13 ± 0.09 −18.90 p48 55894.113 133.04 19.16 ± 0.34 −17.87 p48 55813.326 56.62 18.12 ± 0.09 −18.91 p48 55894.165 133.09 19.32 ± 0.22 −17.72 p48 55817.388 60.46 18.47 ± 0.19 −18.56 p48 55895.095 133.97 19.41 ± 0.13 −17.62 p48 55818.297 61.32 18.24 ± 0.16 −18.79 p48 55895.139 134.01 19.07 ± 0.25 −17.97 p48 55818.343 61.36 18.29 ± 0.16 −18.74 p48 55896.103 134.92 19.65 ± 0.24 −17.39 p48 55819.386 62.35 18.10 ± 0.14 −18.93 p48 55899.097 137.75 19.15 ± 0.26 −17.88 p48

88 De Cia et al.

Table D38. Continuation of Table D37.

MJD Phase mg Mg Telescope Reference 55901.130 139.68 19.18 ± 0.28 −17.86 p48 55902.093 140.59 19.16 ± 0.24 −17.87 p48 55902.138 140.63 19.43 ± 0.22 −17.60 p48 55903.088 141.53 19.86 ± 0.25 −17.17 p48 55903.114 141.55 19.43 ± 0.18 −17.61 p48 55904.100 142.49 19.70 ± 0.27 −17.34 p48 55904.146 142.53 19.52 ± 0.27 −17.52 p48 55906.147 144.42 19.84 ± 0.17 −17.19 p48 55916.115 153.85 19.68 ± 0.15 −17.35 p48 55916.167 153.90 19.55 ± 0.20 −17.48 p48

PTF SLSN-I light curves 89

Table D39. PTF 11rks photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 55906.082 −24.37 20.18 ± 0.23 r p48 55946.092 9.19 18.65 ± 0.31 r p48 55906.140 −24.32 20.57 ± 0.20 r p48 55946.127 9.22 19.33 ± 0.20 i p60 55916.092 −15.97 19.43 ± 0.16 r p48 55946.129 9.22 19.45 ± 0.17 r p60 55916.136 −15.93 19.63 ± 0.11 r p48 55946.130 9.22 19.69 ± 0.16 B p60 55922.137 −10.90 19.16 ± 0.10 r p48 55946.134 9.22 18.91 ± 0.14 i p60 55923.094 −10.10 19.23 ± 0.11 r p48 55946.135 9.22 18.86 ± 0.15 r p48 55923.138 −10.06 19.16 ± 0.09 r p48 55946.136 9.22 19.28 ± 0.13 r p60 55923.318 −9.91 18.93 ± 0.13 r p60 55946.137 9.23 19.68 ± 0.15 B p60 55924.105 −9.25 19.07 ± 0.08 r p48 55947.136 10.06 19.05 ± 0.11 r p48 55924.149 −9.21 19.22 ± 0.09 r p48 55949.148 11.75 19.04 ± 0.09 r p48 55925.090 −8.43 19.13 ± 0.09 i p60 55949.195 11.79 19.09 ± 0.12 r p48 55925.092 −8.42 19.16 ± 0.08 B p60 55952.106 14.23 19.15 ± 0.10 r p48 55925.093 −8.42 19.06 ± 0.07 g p60 55952.117 14.24 18.86 ± 0.08 i p60 55925.095 −8.42 19.05 ± 0.10 i p60 55952.118 14.24 19.22 ± 0.08 r p60 55925.096 −8.42 19.09 ± 0.08 r p48 55952.120 14.24 20.17 ± 0.13 B p60 55925.096 −8.42 19.19 ± 0.09 B p60 55952.122 14.24 19.85 ± 0.09 g p60 55925.098 −8.42 19.23 ± 0.06 g p60 55952.151 14.27 19.07 ± 0.09 r p48 55925.178 −8.35 19.07 ± 0.09 r p48 55953.097 15.06 19.02 ± 0.10 r p48 55926.096 −7.58 18.98 ± 0.08 r p48 55953.141 15.10 19.17 ± 0.09 r p48 55926.140 −7.55 19.03 ± 0.08 r p48 55954.097 15.90 19.15 ± 0.14 r p48 55926.275 −7.43 19.00 ± 0.14 r p60 55954.141 15.94 19.21 ± 0.12 r p48 55932.136 −2.52 18.98 ± 0.10 r p48 55959.111 20.11 19.03 ± 0.18 r p48 55936.107 0.81 18.82 ± 0.09 r p48 55959.132 20.12 19.15 ± 0.15 i p60 55936.150 0.85 18.91 ± 0.10 r p48 55959.133 20.12 19.20 ± 0.18 r p60 55937.087 1.64 18.83 ± 0.09 r p48 55959.155 20.14 19.18 ± 0.15 r p48 55937.131 1.67 18.92 ± 0.13 r p48 55960.102 20.94 19.29 ± 0.16 r p48 55939.149 3.36 18.83 ± 0.09 r p48 55960.127 20.96 19.20 ± 0.16 i p60 55939.186 3.40 18.91 ± 0.10 r p48 55960.129 20.96 19.44 ± 0.15 r p60 55940.090 4.15 18.92 ± 0.12 r p48 55960.133 20.96 20.65 ± 0.30 g p60 55940.142 4.20 18.88 ± 0.11 r p48 55960.145 20.97 19.11 ± 0.16 r p48 55940.145 4.20 18.71 ± 0.10 i p60 55961.125 21.79 19.70 ± 0.27 i p60 55940.146 4.20 18.83 ± 0.09 r p60 55961.129 21.80 20.35 ± 0.31 g p60 55940.148 4.20 19.53 ± 0.12 B p60 55961.220 21.87 19.37 ± 0.20 r p48 55940.150 4.20 19.05 ± 0.09 g p60 55962.122 22.63 19.56 ± 0.13 r p48 55941.089 4.99 18.97 ± 0.10 r p48 55962.131 22.64 19.15 ± 0.10 i p60 55943.197 6.76 18.81 ± 0.09 r p48 55962.132 22.64 20.72 ± 0.21 B p60 55943.243 6.80 18.93 ± 0.09 r p48 55962.135 22.64 20.28 ± 0.09 g p60 55943.262 6.81 18.85 ± 0.08 i p60 55962.194 22.69 19.42 ± 0.16 r p48 55943.263 6.82 19.00 ± 0.09 r p60 55963.106 23.46 19.49 ± 0.24 r p48 55943.265 6.82 19.51 ± 0.11 B p60 55966.126 25.99 19.58 ± 0.17 i p60 55943.267 6.82 19.24 ± 0.08 g p60 55966.128 25.99 19.84 ± 0.18 r p60 55943.269 6.82 18.73 ± 0.09 i p60 55967.134 26.83 19.52 ± 0.08 i p60 55943.271 6.82 19.04 ± 0.08 r p60 55967.136 26.84 21.37 ± 0.23 B p60 55943.272 6.82 19.53 ± 0.11 B p60 55967.138 26.84 20.70 ± 0.10 g p60 55943.275 6.83 19.23 ± 0.08 g p60 55968.203 27.73 19.39 ± 0.29 r p48 55944.142 7.55 18.93 ± 0.09 r p48 55974.141 32.71 20.41 ± 0.28 r p60

90 De Cia et al.

Table D40. Continuation of Table D39. MJD Phase m Filter Telescope 55975.134 33.54 19.99 ± 0.09 i p60 55975.135 33.54 20.33 ± 0.09 r p60 55975.137 33.55 21.68 ± 0.28 B p60 55975.140 33.55 21.60 ± 0.16 g p60 55979.121 36.89 22.06 ± 0.21 g p60 55990.150 46.14 20.94 ± 0.34 i p60 55990.153 46.14 21.05 ± 0.35 r p60 56079.481 121.05 21.58 ± 0.22 r p60 56082.478 123.57 21.09 ± 0.22 g p60 56086.460 126.91 22.19 ± 0.29 r p60 56089.452 129.42 22.04 ± 0.26 r p60 56098.432 136.95 21.42 ± 0.32 i p60 56099.447 137.80 22.22 ± 0.32 i p60 56105.407 142.80 21.54 ± 0.29 i p60 56138.399 170.46 22.19 ± 0.30 r p60 56151.333 181.31 22.33 ± 0.35 i p60

PTF SLSN-I light curves 91

Table D41. PTF 11rks rest-frame g photometry data.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 55906.082 −24.37 20.28 ± 0.23 −19.58 p48 55949.148 11.75 19.26 ± 0.09 −20.60 p48 55906.140 −24.32 20.67 ± 0.20 −19.20 p48 55949.195 11.79 19.31 ± 0.12 −20.55 p48 55916.092 −15.97 19.56 ± 0.16 −20.30 p48 55951.730 13.92 19.33 ± 0.03 −20.53 FTN III 55916.136 −15.93 19.76 ± 0.11 −20.10 p48 55952.106 14.23 19.38 ± 0.10 −20.48 p48 55922.137 −10.90 19.31 ± 0.10 −20.56 p48 55952.118 14.24 19.45 ± 0.08 −20.42 p60 55923.094 −10.10 19.39 ± 0.11 −20.48 p48 55952.151 14.27 19.29 ± 0.09 −20.57 p48 55923.138 −10.06 19.31 ± 0.09 −20.55 p48 55953.097 15.06 19.25 ± 0.10 −20.61 p48 55923.318 −9.91 19.09 ± 0.13 −20.78 p60 55953.141 15.10 19.40 ± 0.09 −20.47 p48 55924.105 −9.25 19.22 ± 0.08 −20.64 p48 55954.097 15.90 19.38 ± 0.14 −20.48 p48 55924.149 −9.21 19.38 ± 0.09 −20.49 p48 55954.141 15.94 19.45 ± 0.12 −20.42 p48 55925.096 −8.42 19.25 ± 0.08 −20.61 p48 55954.440 16.19 19.46 ± 0.06 −20.40 LT III 55925.178 −8.35 19.23 ± 0.09 −20.63 p48 55956.840 18.20 19.52 ± 0.21 −20.34 FTN III 55926.096 −7.58 19.15 ± 0.08 −20.72 p48 55959.111 20.11 19.28 ± 0.18 −20.59 p48 55926.140 −7.55 19.20 ± 0.08 −20.67 p48 55959.133 20.12 19.44 ± 0.18 −20.42 p60 55926.275 −7.43 19.16 ± 0.14 −20.70 p60 55959.155 20.14 19.42 ± 0.15 −20.44 p48 55929.420 −4.79 19.02 ± 0.20 −20.84 LT III 55960.102 20.94 19.53 ± 0.16 −20.33 p48 55930.420 −3.96 18.93 ± 0.04 −20.93 LT III 55960.129 20.96 19.69 ± 0.15 −20.17 p60 55931.340 −3.18 18.88 ± 0.03 −20.98 LT III 55960.145 20.97 19.36 ± 0.16 −20.50 p48 55932.136 −2.52 19.16 ± 0.10 −20.71 p48 55961.220 21.87 19.62 ± 0.20 −20.24 p48 55932.720 −2.03 18.87 ± 0.05 −20.99 FTN III 55962.122 22.63 19.81 ± 0.13 −20.05 p48 55935.730 0.50 18.97 ± 0.02 −20.89 FTN III 55962.194 22.69 19.67 ± 0.16 −20.19 p48 55936.107 0.81 19.01 ± 0.09 −20.85 p48 55962.750 23.16 19.69 ± 0.04 −20.17 FTN III 55936.150 0.85 19.10 ± 0.10 −20.76 p48 55963.106 23.46 19.74 ± 0.24 −20.12 p48 55936.400 1.06 18.98 ± 0.03 −20.88 LT III 55966.128 25.99 20.09 ± 0.18 −19.77 p60 55937.087 1.64 19.03 ± 0.09 −20.84 p48 55966.740 26.50 20.12 ± 0.08 −19.74 FTN III 55937.131 1.67 19.12 ± 0.13 −20.74 p48 55968.203 27.73 19.65 ± 0.29 −20.21 p48 55939.149 3.36 19.03 ± 0.09 −20.83 p48 55974.141 32.71 20.69 ± 0.28 −19.18 p60 55939.186 3.40 19.11 ± 0.10 −20.76 p48 55975.135 33.54 20.60 ± 0.09 −19.26 p60 55939.320 3.51 19.05 ± 0.06 −20.81 LT III 55990.153 46.14 21.34 ± 0.35 −18.52 p60 55940.090 4.15 19.12 ± 0.12 −20.74 p48 55990.340 46.30 20.93 ± 0.15 −18.93 LT III 55940.142 4.20 19.08 ± 0.11 −20.78 p48 56079.481 121.05 21.92 ± 0.22 −17.95 p60 55940.146 4.20 19.03 ± 0.09 −20.83 p60 56086.460 126.91 22.52 ± 0.29 −17.34 p60 55941.089 4.99 19.17 ± 0.10 −20.69 p48 56089.452 129.42 22.38 ± 0.26 −17.48 p60 55941.320 5.19 19.06 ± 0.03 −20.80 LT III 56138.399 170.46 22.51 ± 0.30 −17.36 p60 55942.350 6.05 19.07 ± 0.03 −20.80 LT III 55943.197 6.76 19.02 ± 0.09 −20.84 p48 55943.243 6.80 19.14 ± 0.09 −20.72 p48 55943.263 6.82 19.20 ± 0.09 −20.66 p60 55943.271 6.82 19.25 ± 0.08 −20.61 p60 55944.142 7.55 19.14 ± 0.09 −20.72 p48 55946.092 9.19 18.87 ± 0.31 −21.00 p48 55946.129 9.22 19.67 ± 0.17 −20.20 p60 55946.135 9.22 19.07 ± 0.15 −20.79 p48 55946.136 9.22 19.49 ± 0.13 −20.37 p60 55947.136 10.06 19.27 ± 0.11 −20.59 p48 55948.750 11.42 19.23 ± 0.02 −20.63 FTN III

92 De Cia et al.

Table D42. PTF 12dam photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56025.328 −60.50 20.03 ± 0.22 r p48 56070.436 −19.77 17.20 ± 0.06 r p48 56027.257 −58.75 19.93 ± 0.17 r p48 56070.469 −19.74 17.21 ± 0.06 r p48 56027.286 −58.73 20.02 ± 0.16 r p48 56072.340 −18.05 17.78 ± 0.03 i LCOGT 56027.315 −58.70 19.95 ± 0.15 r p48 56072.342 −18.05 17.43 ± 0.03 g LCOGT 56033.489 −53.13 19.80 ± 0.13 r p48 56072.343 −18.05 17.42 ± 0.04 g LCOGT 56034.162 −52.52 19.87 ± 0.13 r p48 56075.234 −15.43 17.24 ± 0.06 i p60 56034.194 −52.49 19.87 ± 0.13 r p48 56075.235 −15.43 17.13 ± 0.06 r p60 56034.256 −52.44 19.74 ± 0.12 r p48 56075.236 −15.43 16.67 ± 0.06 B p60 56036.166 −50.71 19.69 ± 0.13 r p48 56075.237 −15.43 17.05 ± 0.06 g p60 56036.208 −50.67 19.59 ± 0.12 r p48 56075.383 −15.30 17.38 ± 0.03 g LCOGT 56036.371 −50.53 19.62 ± 0.12 r p48 56075.385 −15.30 17.39 ± 0.05 g LCOGT 56038.345 −48.74 19.29 ± 0.09 r p48 56076.373 −14.41 17.04 ± 0.06 r p48 56038.375 −48.72 19.31 ± 0.09 r p48 56076.404 −14.38 17.07 ± 0.06 r p48 56040.427 −46.86 19.20 ± 0.09 r p48 56079.341 −11.73 17.20 ± 0.03 g LCOGT 56040.458 −46.84 19.14 ± 0.09 r p48 56079.342 −11.73 16.98 ± 0.05 g LCOGT 56046.398 −41.47 18.47 ± 0.08 r p48 56080.203 −10.95 17.12 ± 0.06 i p60 56046.428 −41.44 18.49 ± 0.08 r p48 56080.204 −10.95 16.94 ± 0.06 r p60 56048.432 −39.64 18.26 ± 0.08 r p48 56080.204 −10.95 16.74 ± 0.06 B p60 56048.466 −39.60 18.35 ± 0.07 r p48 56080.205 −10.95 16.69 ± 0.06 g p60 56048.497 −39.58 18.27 ± 0.08 r p48 56080.206 −10.95 17.12 ± 0.06 i p60 56058.475 −30.57 17.67 ± 0.07 r p48 56080.207 −10.94 16.96 ± 0.06 r p60 56059.275 −29.84 17.61 ± 0.06 r p48 56080.208 −10.94 16.77 ± 0.06 B p60 56061.329 −27.99 17.55 ± 0.06 r p48 56080.212 −10.94 16.64 ± 0.06 g p60 56063.291 −26.22 17.45 ± 0.06 r p48 56083.356 −8.10 16.96 ± 0.03 g LCOGT 56063.322 −26.19 17.43 ± 0.06 r p48 56083.357 −8.10 16.92 ± 0.05 g LCOGT 56063.352 −26.16 17.49 ± 0.06 r p48 56083.360 −8.10 16.92 ± 0.02 r LCOGT 56065.441 −24.28 17.38 ± 0.07 r p48 56083.361 −8.10 17.28 ± 0.03 i LCOGT 56066.380 −23.43 17.36 ± 0.06 r p48 56083.363 −8.09 17.33 ± 0.02 i LCOGT 56066.414 −23.40 17.38 ± 0.06 r p48 56085.210 −6.43 17.04 ± 0.06 i p60 56066.448 −23.37 17.36 ± 0.06 r p48 56085.211 −6.43 16.89 ± 0.06 r p60 56068.219 −21.77 17.45 ± 0.06 i p60 56085.212 −6.43 16.70 ± 0.06 B p60 56068.221 −21.77 17.33 ± 0.06 r p60 56085.213 −6.42 17.15 ± 0.06 i p60 56068.222 −21.77 17.01 ± 0.06 B p60 56085.214 −6.42 16.96 ± 0.06 r p60 56068.224 −21.76 17.01 ± 0.06 g p60 56085.215 −6.42 16.70 ± 0.06 B p60 56068.226 −21.76 17.47 ± 0.06 i p60 56085.216 −6.42 16.66 ± 0.06 g p60 56068.227 −21.76 17.26 ± 0.06 r p60 56086.442 −5.31 16.89 ± 0.05 g LCOGT 56068.229 −21.76 17.08 ± 0.06 B p60 56086.443 −5.31 16.91 ± 0.03 g LCOGT 56068.230 −21.76 17.01 ± 0.06 g p60 56086.444 −5.31 16.83 ± 0.02 r LCOGT 56068.477 −21.54 17.29 ± 0.06 r p48 56086.446 −5.31 16.86 ± 0.02 r LCOGT 56070.264 −19.92 17.15 ± 0.02 r LCOGT 56086.447 −5.31 17.28 ± 0.03 i LCOGT 56070.265 −19.92 17.13 ± 0.02 r LCOGT 56086.448 −5.31 17.28 ± 0.02 i LCOGT 56070.267 −19.92 17.69 ± 0.02 i LCOGT 56089.332 −2.71 16.94 ± 0.05 g LCOGT 56070.268 −19.92 17.57 ± 0.03 i LCOGT 56089.333 −2.70 16.93 ± 0.05 g LCOGT 56070.269 −19.92 17.48 ± 0.04 g LCOGT 56089.334 −2.70 16.80 ± 0.02 r LCOGT 56070.271 −19.92 17.47 ± 0.04 g LCOGT 56089.336 −2.70 16.81 ± 0.02 r LCOGT 56070.401 −19.80 17.19 ± 0.06 r p48 56089.337 −2.70 17.22 ± 0.01 i LCOGT

PTF SLSN-I light curves 93

Table D43. Continuation of Table D42.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56089.338 −2.70 17.23 ± 0.03 i LCOGT 56118.257 23.41 17.00 ± 0.06 r p60 56090.200 −1.92 16.99 ± 0.06 i p60 56118.258 23.41 17.02 ± 0.06 B p60 56090.201 −1.92 16.84 ± 0.06 r p60 56118.259 23.41 16.86 ± 0.06 g p60 56090.202 −1.92 16.40 ± 0.06 B p60 56127.277 31.56 17.35 ± 0.07 g p60 56090.203 −1.92 16.61 ± 0.06 g p60 56128.378 32.55 17.33 ± 0.04 g LCOGT 56090.204 −1.92 17.12 ± 0.06 i p60 56128.379 32.55 17.35 ± 0.04 g LCOGT 56090.205 −1.92 16.83 ± 0.06 r p60 56128.380 32.55 17.12 ± 0.02 r LCOGT 56090.206 −1.92 16.76 ± 0.06 B p60 56128.381 32.55 17.14 ± 0.03 r LCOGT 56090.221 −1.90 16.66 ± 0.06 g p60 56128.383 32.56 17.46 ± 0.02 i LCOGT 56093.433 1.00 16.94 ± 0.03 g LCOGT 56128.384 32.56 17.43 ± 0.02 i LCOGT 56093.434 1.00 16.94 ± 0.04 g LCOGT 56129.199 33.29 17.31 ± 0.06 i p60 56098.293 5.39 17.04 ± 0.06 i p60 56129.200 33.29 17.15 ± 0.06 r p60 56098.294 5.39 16.90 ± 0.06 r p60 56129.201 33.29 17.28 ± 0.06 B p60 56098.295 5.39 16.77 ± 0.06 B p60 56129.202 33.29 17.10 ± 0.06 g p60 56098.296 5.39 17.05 ± 0.06 i p60 56131.266 35.16 17.42 ± 0.04 g LCOGT 56098.297 5.39 16.87 ± 0.06 r p60 56131.267 35.16 17.41 ± 0.04 g LCOGT 56098.298 5.39 16.76 ± 0.06 B p60 56149.243 51.39 17.75 ± 0.05 g LCOGT 56098.299 5.39 16.66 ± 0.06 g p60 56149.244 51.39 17.32 ± 0.02 r LCOGT 56103.211 9.83 17.01 ± 0.06 i p60 56149.244 51.39 17.85 ± 0.07 g LCOGT 56103.212 9.83 16.88 ± 0.06 r p60 56149.245 51.39 17.33 ± 0.01 r LCOGT 56103.224 9.84 16.85 ± 0.06 g p60 56149.246 51.39 17.59 ± 0.03 i LCOGT 56103.225 9.84 17.07 ± 0.06 i p60 56149.247 51.39 17.59 ± 0.02 i LCOGT 56103.226 9.84 17.03 ± 0.06 r p60 56152.241 54.10 17.85 ± 0.09 g LCOGT 56103.227 9.84 16.73 ± 0.06 B p60 56152.242 54.10 17.73 ± 0.05 g LCOGT 56103.228 9.84 16.72 ± 0.06 g p60 56152.243 54.10 17.38 ± 0.03 r LCOGT 56108.209 14.34 17.04 ± 0.06 i p60 56152.243 54.10 17.40 ± 0.02 r LCOGT 56108.209 14.34 16.94 ± 0.06 r p60 56152.244 54.10 17.58 ± 0.02 i LCOGT 56108.210 14.34 16.87 ± 0.06 B p60 56152.245 54.10 17.63 ± 0.02 i LCOGT 56108.211 14.34 16.68 ± 0.06 g p60 56156.239 57.71 17.89 ± 0.08 g LCOGT 56108.212 14.34 17.05 ± 0.06 i p60 56156.240 57.71 17.82 ± 0.05 g LCOGT 56108.213 14.34 16.94 ± 0.06 r p60 56156.240 57.71 17.46 ± 0.01 r LCOGT 56108.214 14.34 16.85 ± 0.06 B p60 56156.241 57.71 17.53 ± 0.02 r LCOGT 56108.215 14.34 16.75 ± 0.06 g p60 56156.242 57.71 17.69 ± 0.02 i LCOGT 56113.202 18.85 17.06 ± 0.06 i p60 56156.243 57.71 17.69 ± 0.03 i LCOGT 56113.203 18.85 17.00 ± 0.06 r p60 56159.199 60.38 17.55 ± 0.07 i p60 56113.204 18.85 16.95 ± 0.07 B p60 56161.176 62.17 17.48 ± 0.06 r p60 56113.205 18.85 16.74 ± 0.06 g p60 56161.177 62.17 17.98 ± 0.07 B p60 56113.206 18.85 17.09 ± 0.06 i p60 56161.178 62.17 17.75 ± 0.06 g p60 56113.207 18.85 16.94 ± 0.06 r p60 56161.236 62.22 17.93 ± 0.05 g LCOGT 56113.208 18.85 16.97 ± 0.07 B p60 56161.237 62.22 17.98 ± 0.06 g LCOGT 56113.209 18.85 16.77 ± 0.06 g p60 56161.239 62.22 17.80 ± 0.04 i LCOGT 56118.253 23.41 17.11 ± 0.06 i p60 56161.240 62.22 17.74 ± 0.03 i LCOGT 56118.254 23.41 17.02 ± 0.06 r p60 56165.167 65.77 17.47 ± 0.07 i p60 56118.255 23.41 16.87 ± 0.06 g p60 56177.147 76.59 17.61 ± 0.07 i p60 56118.255 23.41 17.05 ± 0.06 B p60 56177.148 76.59 17.70 ± 0.06 r p60 56118.256 23.41 17.14 ± 0.06 i p60 56177.149 76.59 18.33 ± 0.08 B p60

94 De Cia et al.

Table D44. Continuation of Table D42.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56177.150 76.59 17.86 ± 0.06 g p60 56266.472 157.24 19.08 ± 0.09 r p60 56181.231 80.27 18.18 ± 0.07 g LCOGT 56266.473 157.24 19.50 ± 0.12 g p60 56181.233 80.28 17.79 ± 0.04 r LCOGT 56268.466 159.04 19.98 ± 0.15 B p60 56181.234 80.28 17.82 ± 0.03 r LCOGT 56273.452 163.54 19.44 ± 0.10 r p60 56181.235 80.28 18.05 ± 0.04 i LCOGT 56273.454 163.54 19.74 ± 0.11 g p60 56185.159 83.82 17.84 ± 0.07 i p60 56281.429 170.75 19.57 ± 0.20 i p60 56185.160 83.82 17.84 ± 0.07 r p60 56281.431 170.75 19.42 ± 0.14 r p60 56185.162 83.82 18.41 ± 0.08 B p60 56283.425 172.55 19.46 ± 0.08 r p60 56185.163 83.82 18.06 ± 0.07 g p60 56283.428 172.55 20.07 ± 0.14 B p60 56185.165 83.83 17.73 ± 0.07 i p60 56283.429 172.55 19.72 ± 0.10 g p60 56185.166 83.83 17.84 ± 0.07 r p60 56289.531 178.06 19.02 ± 0.09 i p60 56185.167 83.83 18.46 ± 0.09 B p60 56297.386 185.15 19.60 ± 0.12 i p60 56185.169 83.83 18.03 ± 0.07 g p60 56297.388 185.16 19.59 ± 0.09 r p60 56187.239 85.70 18.37 ± 0.07 g LCOGT 56297.390 185.16 20.00 ± 0.15 B p60 56187.240 85.70 18.47 ± 0.06 g LCOGT 56297.392 185.16 19.88 ± 0.11 g p60 56187.241 85.70 17.89 ± 0.02 r LCOGT 56323.314 208.57 19.96 ± 0.18 i p60 56196.215 93.80 18.10 ± 0.02 r LCOGT 56323.315 208.57 20.36 ± 0.20 r p60 56196.216 93.80 17.94 ± 0.03 r LCOGT 56323.319 208.57 20.27 ± 0.21 g p60 56196.217 93.80 18.42 ± 0.04 i LCOGT 56324.311 209.47 20.21 ± 0.12 r p60 56197.224 94.71 18.03 ± 0.02 r LCOGT 56345.334 228.45 20.11 ± 0.18 i p60 56197.225 94.72 18.14 ± 0.02 r LCOGT 56345.336 228.45 20.32 ± 0.16 r p60 56197.226 94.72 18.43 ± 0.04 i LCOGT 56345.338 228.45 20.62 ± 0.32 B p60 56197.226 94.72 18.43 ± 0.03 i LCOGT 56345.340 228.45 20.71 ± 0.21 g p60 56200.213 97.41 18.11 ± 0.02 r LCOGT 56345.342 228.45 20.15 ± 0.17 i p60 56200.214 97.41 18.14 ± 0.02 r LCOGT 56345.344 228.46 20.27 ± 0.15 r p60 56200.215 97.41 18.56 ± 0.11 i LCOGT 56345.346 228.46 20.50 ± 0.29 B p60 56201.113 98.23 18.69 ± 0.08 g p60 56345.348 228.46 20.49 ± 0.18 g p60 56201.115 98.23 18.08 ± 0.08 g p60 56346.253 229.28 20.48 ± 0.25 i p60 56202.112 99.13 17.86 ± 0.07 i p60 56346.255 229.28 20.09 ± 0.17 r p60 56202.113 99.13 18.06 ± 0.07 r p60 56346.262 229.29 20.31 ± 0.22 g p60 56214.101 109.95 18.23 ± 0.08 i p60 56347.431 230.34 20.10 ± 0.26 i p60 56214.103 109.95 18.22 ± 0.07 r p60 56347.433 230.34 20.51 ± 0.27 r p60 56214.104 109.96 18.96 ± 0.09 B p60 56347.437 230.35 20.50 ± 0.31 g p60 56214.106 109.96 18.45 ± 0.07 g p60 56349.243 231.98 19.72 ± 0.26 i p60 56237.549 131.12 18.67 ± 0.11 i p60 56350.242 232.88 20.41 ± 0.30 r p60 56245.535 138.34 18.66 ± 0.18 i p60 56350.246 232.88 20.42 ± 0.36 g p60 56245.538 138.34 19.70 ± 0.23 B p60 56352.237 234.68 20.38 ± 0.21 r p60 56245.539 138.34 19.17 ± 0.14 g p60 56352.241 234.68 20.77 ± 0.33 g p60 56250.514 142.83 19.12 ± 0.09 r p60 56353.233 235.58 20.38 ± 0.14 r p60 56251.511 143.73 19.09 ± 0.08 r p60 56353.236 235.58 21.10 ± 0.31 B p60 56252.509 144.63 19.04 ± 0.10 i p60 56353.237 235.58 20.50 ± 0.15 g p60 56252.510 144.63 19.84 ± 0.16 B p60 56356.228 238.28 20.38 ± 0.17 i p60 56252.512 144.64 19.47 ± 0.10 g p60 56362.272 243.74 20.47 ± 0.14 r p60 56262.535 153.69 19.33 ± 0.14 r p60 56362.275 243.74 20.88 ± 0.26 B p60 56262.537 153.69 20.06 ± 0.26 g p60 56362.276 243.75 20.70 ± 0.15 g p60 56265.478 156.34 19.44 ± 0.26 g p60 56362.279 243.75 20.47 ± 0.14 r p60

PTF SLSN-I light curves 95

Table D45. Continuation of Table D42.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56362.281 243.75 20.84 ± 0.24 B p60 56507.216 374.62 22.01 ± 0.28 r p60 56362.283 243.75 20.70 ± 0.15 g p60 56362.479 243.93 20.62 ± 0.18 r p48 56362.509 243.96 20.34 ± 0.15 r p48 56362.539 243.98 20.50 ± 0.18 r p48 56364.203 245.49 20.18 ± 0.14 i p60 56366.489 247.55 20.32 ± 0.22 r p48 56366.500 247.56 20.48 ± 0.15 r p48 56366.511 247.57 20.70 ± 0.18 r p48 56366.522 247.58 20.52 ± 0.16 r p48 56369.539 250.30 20.43 ± 0.18 r p48 56370.309 251.00 20.61 ± 0.18 r p60 56370.310 251.00 20.71 ± 0.28 B p60 56371.249 251.85 21.16 ± 0.34 g p60 56372.197 252.70 20.36 ± 0.27 r p60 56373.179 253.59 20.65 ± 0.30 i p60 56373.181 253.59 20.43 ± 0.26 r p60 56374.178 254.49 20.11 ± 0.30 r p60 56374.513 254.79 20.39 ± 0.17 r p48 56375.291 255.50 20.58 ± 0.19 i p60 56375.293 255.50 21.24 ± 0.23 r p60 56375.295 255.50 20.89 ± 0.14 g p60 56376.170 256.29 20.80 ± 0.30 r p60 56376.506 256.59 20.93 ± 0.25 r p48 56382.171 261.71 20.91 ± 0.26 B p60 56385.515 264.73 20.39 ± 0.32 r p48 56386.171 265.32 21.13 ± 0.18 g p60 56388.496 267.42 21.10 ± 0.29 r p60 56388.497 267.42 21.25 ± 0.20 g p60 56390.279 269.03 20.63 ± 0.28 r p60 56392.268 270.83 21.12 ± 0.31 r p60 56409.274 286.18 20.72 ± 0.24 i p60 56412.465 289.06 21.43 ± 0.29 i p60 56413.448 289.95 21.50 ± 0.31 r p60 56416.395 292.61 21.82 ± 0.35 r p60 56416.396 292.61 21.80 ± 0.22 g p60 56422.435 298.06 21.29 ± 0.25 i p60 56422.440 298.07 22.23 ± 0.33 g p60 56425.342 300.69 21.85 ± 0.32 r p60 56431.387 306.15 21.33 ± 0.30 i p60 56432.325 306.99 21.51 ± 0.28 i p60 56452.323 325.05 21.89 ± 0.34 r p60 56459.237 331.29 21.31 ± 0.23 i p60 56460.294 332.25 21.38 ± 0.33 i p60 56470.268 341.25 21.76 ± 0.36 i p60 56471.211 342.11 22.11 ± 0.30 r p60

96 De Cia et al.

Table D46. PTF 12dam rest-frame g photometry data.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 56025.328 −60.50 19.92 ± 0.22 −18.57 p48 56080.204 −10.95 16.91 ± 0.06 −21.57 p60 56027.257 −58.75 19.82 ± 0.17 −18.66 p48 56080.207 −10.94 16.93 ± 0.06 −21.55 p60 56027.286 −58.73 19.91 ± 0.16 −18.57 p48 56080.940 −10.28 16.93 ± 0.01 −21.55 LT+RATCam IV 56027.315 −58.70 19.84 ± 0.15 −18.64 p48 56081.940 −9.38 16.91 ± 0.01 −21.57 LT+RATCam IV 56030.480 −55.84 19.25 ± 0.17 −19.24 PS1 IV 56083.360 −8.10 16.89 ± 0.02 −21.59 LCOGT 56033.489 −53.13 19.69 ± 0.13 −18.79 p48 56085.211 −6.43 16.89 ± 0.06 −21.59 p60 56034.162 −52.52 19.76 ± 0.13 −18.72 p48 56085.214 −6.42 16.96 ± 0.06 −21.52 p60 56034.194 −52.49 19.76 ± 0.13 −18.72 p48 56086.444 −5.31 16.82 ± 0.02 −21.66 LCOGT 56034.256 −52.44 19.63 ± 0.12 −18.85 p48 56086.446 −5.31 16.85 ± 0.02 −21.63 LCOGT 56036.166 −50.71 19.58 ± 0.13 −18.90 p48 56089.334 −2.70 16.81 ± 0.02 −21.68 LCOGT 56036.208 −50.67 19.48 ± 0.12 −19.00 p48 56089.336 −2.70 16.81 ± 0.02 −21.67 LCOGT 56036.371 −50.53 19.51 ± 0.12 −18.98 p48 56090.201 −1.92 16.85 ± 0.06 −21.63 p60 56038.345 −48.74 19.18 ± 0.09 −19.30 p48 56090.205 −1.92 16.84 ± 0.06 −21.64 p60 56038.375 −48.72 19.20 ± 0.09 −19.29 p48 56098.030 5.15 16.92 ± 0.01 −21.56 TNG+LRS IV 56040.427 −46.86 19.09 ± 0.09 −19.40 p48 56098.294 5.39 16.94 ± 0.06 −21.54 p60 56040.458 −46.84 19.03 ± 0.09 −19.46 p48 56098.297 5.39 16.91 ± 0.06 −21.57 p60 56046.398 −41.47 18.36 ± 0.08 −20.13 p48 56103.212 9.83 16.94 ± 0.06 −21.54 p60 56046.428 −41.44 18.37 ± 0.08 −20.11 p48 56103.226 9.84 17.10 ± 0.06 −21.39 p60 56046.500 −41.38 18.10 ± 0.17 −20.39 PS1 IV 56104.020 10.56 17.03 ± 0.01 −21.46 WHT IV 56048.432 −39.64 18.14 ± 0.08 −20.34 p48 56108.209 14.34 17.02 ± 0.06 −21.47 p60 56048.466 −39.60 18.24 ± 0.07 −20.25 p48 56108.213 14.34 17.02 ± 0.06 −21.47 p60 56048.497 −39.58 18.16 ± 0.08 −20.32 p48 56113.203 18.85 17.10 ± 0.06 −21.38 p60 56058.475 −30.57 17.56 ± 0.07 −20.92 p48 56113.207 18.85 17.04 ± 0.06 −21.45 p60 56059.275 −29.84 17.50 ± 0.06 −20.99 p48 56116.010 21.38 17.16 ± 0.01 −21.32 NOT IV 56061.329 −27.99 17.44 ± 0.06 −21.04 p48 56118.254 23.41 17.14 ± 0.06 −21.34 p60 56063.291 −26.22 17.34 ± 0.06 −21.14 p48 56118.257 23.41 17.11 ± 0.06 −21.37 p60 56063.322 −26.19 17.32 ± 0.06 −21.17 p48 56128.030 32.24 17.30 ± 0.05 −21.18 GTC IV 56063.352 −26.16 17.38 ± 0.06 −21.11 p48 56128.380 32.55 17.25 ± 0.02 −21.23 LCOGT 56065.441 −24.28 17.28 ± 0.07 −21.20 p48 56128.381 32.55 17.28 ± 0.03 −21.21 LCOGT 56066.380 −23.43 17.26 ± 0.06 −21.22 p48 56129.200 33.29 17.29 ± 0.06 −21.19 p60 56066.414 −23.40 17.28 ± 0.06 −21.20 p48 56148.930 51.11 17.61 ± 0.01 −20.87 NOT IV 56066.448 −23.37 17.26 ± 0.06 −21.22 p48 56149.244 51.39 17.51 ± 0.02 −20.98 LCOGT 56068.221 −21.77 17.24 ± 0.06 −21.24 p60 56149.245 51.39 17.52 ± 0.01 −20.97 LCOGT 56068.227 −21.76 17.17 ± 0.06 −21.31 p60 56152.243 54.10 17.57 ± 0.03 −20.91 LCOGT 56068.477 −21.54 17.21 ± 0.06 −21.27 p48 56152.243 54.10 17.59 ± 0.02 −20.90 LCOGT 56070.264 −19.92 17.06 ± 0.02 −21.42 LCOGT 56156.240 57.71 17.66 ± 0.01 −20.82 LCOGT 56070.265 −19.92 17.05 ± 0.02 −21.43 LCOGT 56156.241 57.71 17.73 ± 0.02 −20.75 LCOGT 56070.401 −19.80 17.11 ± 0.06 −21.37 p48 56160.920 61.93 17.79 ± 0.01 −20.69 WHT IV 56070.436 −19.77 17.12 ± 0.06 −21.36 p48 56161.176 62.17 17.69 ± 0.06 −20.79 p60 56070.469 −19.74 17.13 ± 0.06 −21.35 p48 56174.850 74.51 18.00 ± 0.01 −20.48 NOT IV 56071.130 −19.14 17.16 ± 0.01 −21.33 GTC IV 56177.148 76.59 17.93 ± 0.06 −20.55 p60 56072.920 −17.52 17.11 ± 0.01 −21.38 WHT IV 56181.233 80.28 18.02 ± 0.04 −20.46 LCOGT 56075.235 −15.43 17.08 ± 0.06 −21.40 p60 56181.234 80.28 18.06 ± 0.03 −20.42 LCOGT 56076.373 −14.41 16.99 ± 0.06 −21.49 p48 56185.160 83.82 18.08 ± 0.07 −20.40 p60 56076.404 −14.38 17.03 ± 0.06 −21.46 p48 56185.166 83.83 18.08 ± 0.07 −20.40 p60 56076.950 −13.89 16.97 ± 0.01 −21.51 LT+RATCam IV 56187.241 85.70 18.13 ± 0.02 −20.35 LCOGT

PTF SLSN-I light curves 97

Table D47. Continuation of Table D46.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 56191.860 89.87 18.37 ± 0.01 −20.11 WHT IV 56374.513 254.79 20.62 ± 0.17 −17.87 p48 56196.215 93.80 18.34 ± 0.02 −20.14 LCOGT 56375.293 255.50 21.47 ± 0.23 −17.02 p60 56196.216 93.80 18.19 ± 0.03 −20.29 LCOGT 56376.170 256.29 21.02 ± 0.30 −17.46 p60 56197.224 94.71 18.28 ± 0.02 −20.20 LCOGT 56376.506 256.59 21.15 ± 0.25 −17.34 p48 56197.225 94.72 18.39 ± 0.02 −20.09 LCOGT 56385.515 264.73 20.61 ± 0.32 −17.87 p48 56200.213 97.41 18.36 ± 0.02 −20.12 LCOGT 56388.496 267.42 21.32 ± 0.29 −17.16 p60 56200.214 97.41 18.40 ± 0.02 −20.09 LCOGT 56390.279 269.03 20.85 ± 0.28 −17.63 p60 56202.113 99.13 18.32 ± 0.07 −20.16 p60 56392.268 270.83 21.34 ± 0.31 −17.15 p60 56214.103 109.95 18.49 ± 0.07 −19.99 p60 56413.448 289.95 21.72 ± 0.31 −16.76 p60 56250.514 142.83 19.39 ± 0.09 −19.09 p60 56416.395 292.61 22.05 ± 0.35 −16.44 p60 56251.511 143.73 19.36 ± 0.08 −19.12 p60 56425.342 300.69 22.08 ± 0.32 −16.40 p60 56262.535 153.69 19.60 ± 0.14 −18.88 p60 56432.930 307.54 21.87 ± 0.09 −16.61 LT+RATCam IV 56266.472 157.24 19.35 ± 0.09 −19.14 p60 56452.323 325.05 22.13 ± 0.34 −16.35 p60 56273.452 163.54 19.71 ± 0.10 −18.77 p60 56452.960 325.63 22.47 ± 0.04 −16.01 WHT IV 56281.431 170.75 19.68 ± 0.14 −18.80 p60 56471.211 342.11 22.35 ± 0.30 −16.13 p60 56283.425 172.55 19.72 ± 0.08 −18.76 p60 56507.216 374.62 22.26 ± 0.28 −16.23 p60 56285.210 174.16 19.44 ± 0.02 −19.04 LT+RATCam IV 56287.630 176.34 19.47 ± 0.09 −19.01 FTN IV 56297.388 185.16 19.85 ± 0.09 −18.64 p60 56312.150 198.48 19.88 ± 0.04 −18.61 LT+RATCam IV 56320.210 205.76 19.94 ± 0.05 −18.54 LT+RATCam IV 56323.315 208.57 20.60 ± 0.20 −17.88 p60 56324.311 209.47 20.46 ± 0.12 −18.03 p60 56334.170 218.37 20.11 ± 0.04 −18.38 LT+RATCam IV 56345.336 228.45 20.56 ± 0.16 −17.93 p60 56345.344 228.46 20.51 ± 0.15 −17.98 p60 56346.255 229.28 20.33 ± 0.17 −18.16 p60 56347.433 230.34 20.74 ± 0.27 −17.75 p60 56350.242 232.88 20.64 ± 0.30 −17.85 p60 56352.237 234.68 20.61 ± 0.21 −17.87 p60 56353.233 235.58 20.61 ± 0.14 −17.88 p60 56362.260 243.73 20.49 ± 0.04 −17.99 LT+RATCam IV 56362.272 243.74 20.69 ± 0.14 −17.79 p60 56362.279 243.75 20.70 ± 0.14 −17.79 p60 56362.479 243.93 20.84 ± 0.18 −17.64 p48 56362.509 243.96 20.56 ± 0.15 −17.92 p48 56362.539 243.98 20.73 ± 0.18 −17.75 p48 56366.489 247.55 20.54 ± 0.22 −17.94 p48 56366.500 247.56 20.70 ± 0.15 −17.78 p48 56366.511 247.57 20.92 ± 0.18 −17.56 p48 56366.522 247.58 20.74 ± 0.16 −17.74 p48 56369.539 250.30 20.65 ± 0.18 −17.83 p48 56370.309 251.00 20.84 ± 0.18 −17.65 p60 56372.197 252.70 20.58 ± 0.27 −17.90 p60 56373.181 253.59 20.65 ± 0.26 −17.83 p60 56374.178 254.49 20.33 ± 0.30 −18.15 p60

98 De Cia et al.

Table D48. PTF 12gty photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56086.286 −48.50 21.20 ± 0.36 r p48 56159.279 13.53 20.23 ± 0.13 g p60 56090.440 −44.97 20.91 ± 0.35 r p48 56166.255 19.46 19.61 ± 0.10 i p60 56092.374 −43.32 21.30 ± 0.36 r p48 56166.257 19.46 19.90 ± 0.11 r p60 56092.404 −43.30 20.95 ± 0.32 r p48 56166.259 19.46 20.54 ± 0.29 g p60 56097.373 −39.07 20.92 ± 0.35 r p48 56166.262 19.47 19.52 ± 0.09 i p60 56097.431 −39.02 20.30 ± 0.21 r p48 56166.263 19.47 19.83 ± 0.10 r p60 56099.391 −37.36 20.59 ± 0.25 r p48 56166.266 19.47 20.25 ± 0.12 g p60 56099.425 −37.33 20.56 ± 0.25 r p48 56177.151 28.72 19.70 ± 0.10 i p60 56100.314 −36.58 20.54 ± 0.21 r p48 56177.167 28.73 19.72 ± 0.10 r p60 56100.344 −36.55 20.52 ± 0.23 r p48 56177.171 28.74 20.39 ± 0.15 g p60 56102.311 −34.88 20.58 ± 0.25 r p48 56185.171 35.53 19.77 ± 0.13 i p60 56102.341 −34.85 20.49 ± 0.29 r p48 56185.173 35.53 19.94 ± 0.14 r p60 56102.370 −34.83 20.40 ± 0.24 r p48 56186.137 36.35 20.07 ± 0.12 r p60 56104.303 −33.19 20.60 ± 0.24 r p48 56186.142 36.36 20.99 ± 0.21 g p60 56104.351 −33.14 20.37 ± 0.22 r p48 56187.138 37.20 20.18 ± 0.12 r p60 56104.380 −33.12 20.68 ± 0.30 r p48 56187.142 37.21 20.93 ± 0.17 g p60 56106.301 −31.49 20.30 ± 0.21 r p48 56198.182 46.59 20.32 ± 0.26 i p60 56106.340 −31.45 20.57 ± 0.24 r p48 56199.118 47.38 20.27 ± 0.14 i p60 56106.370 −31.43 20.25 ± 0.19 r p48 56199.120 47.39 20.67 ± 0.20 r p60 56108.297 −29.79 20.51 ± 0.23 r p48 56200.115 48.23 20.29 ± 0.13 i p60 56108.326 −29.77 20.47 ± 0.25 r p48 56200.117 48.23 20.55 ± 0.13 r p60 56108.356 −29.74 20.62 ± 0.28 r p48 56200.122 48.24 21.76 ± 0.29 g p60 56112.234 −26.45 20.40 ± 0.23 r p48 56201.116 49.08 20.74 ± 0.18 r p60 56112.264 −26.42 20.02 ± 0.21 r p48 56202.114 49.93 20.89 ± 0.18 r p60 56117.344 −22.10 20.17 ± 0.19 r p48 56202.119 49.94 21.08 ± 0.19 g p60 56117.376 −22.08 19.82 ± 0.17 r p48 56214.108 60.12 20.27 ± 0.12 i p60 56119.295 −20.45 20.06 ± 0.21 r p48 56214.110 60.12 20.58 ± 0.17 r p60 56123.328 −17.02 19.95 ± 0.16 r p48 56223.094 67.76 20.32 ± 0.14 i p60 56123.357 −16.99 19.86 ± 0.17 r p48 56223.097 67.76 20.65 ± 0.20 r p60 56124.273 −16.22 20.02 ± 0.16 r p48 56226.093 70.31 20.77 ± 0.17 i p60 56124.311 −16.18 19.87 ± 0.18 r p48 56226.095 70.31 20.97 ± 0.20 r p60 56124.353 −16.15 19.98 ± 0.21 r p48 56227.093 71.16 20.49 ± 0.19 i p60 56129.307 −11.94 19.76 ± 0.14 r p48 56227.095 71.16 21.26 ± 0.32 r p60 56129.336 −11.91 19.79 ± 0.16 r p48 56228.091 72.01 20.29 ± 0.13 i p60 56129.366 −11.89 19.80 ± 0.21 r p48 56228.093 72.01 21.00 ± 0.21 r p60 56133.287 −8.56 19.77 ± 0.14 r p48 56272.570 109.80 20.72 ± 0.20 i p60 56133.317 −8.53 19.86 ± 0.17 r p48 56283.540 119.12 21.36 ± 0.23 i p60 56133.347 −8.50 19.72 ± 0.15 r p48 56283.542 119.13 21.26 ± 0.23 r p60 56136.315 −5.98 20.04 ± 0.21 r p48 56289.541 124.22 21.40 ± 0.27 i p60 56136.345 −5.96 19.56 ± 0.18 r p48 56289.544 124.23 21.81 ± 0.34 r p60 56138.341 −4.26 19.45 ± 0.08 i p60 56297.510 130.99 21.48 ± 0.27 i p60 56138.342 −4.26 19.45 ± 0.09 r p60 56297.512 131.00 21.54 ± 0.27 r p60 56148.299 4.20 19.52 ± 0.10 i p60 56300.487 133.52 21.29 ± 0.32 r p60 56148.304 4.21 20.35 ± 0.24 g p60 56159.274 13.53 19.71 ± 0.10 i p60 56159.275 13.53 19.72 ± 0.10 r p60

PTF SLSN-I light curves 99

Table D49. PTF 12gty rest-frame g photometry data.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 56086.286 −48.50 21.26 ± 0.36 −18.40 p48 56186.137 36.35 20.32 ± 0.12 −19.34 p60 56090.440 −44.97 20.96 ± 0.35 −18.70 p48 56187.138 37.20 20.44 ± 0.12 −19.22 p60 56092.374 −43.32 21.35 ± 0.36 −18.31 p48 56199.120 47.39 20.95 ± 0.20 −18.71 p60 56092.404 −43.30 21.00 ± 0.32 −18.65 p48 56200.117 48.23 20.83 ± 0.13 −18.83 p60 56097.373 −39.07 20.97 ± 0.35 −18.68 p48 56201.116 49.08 21.02 ± 0.18 −18.64 p60 56097.431 −39.02 20.36 ± 0.21 −19.30 p48 56202.114 49.93 21.17 ± 0.18 −18.49 p60 56099.391 −37.36 20.64 ± 0.25 −19.02 p48 56214.110 60.12 20.87 ± 0.17 −18.79 p60 56099.425 −37.33 20.61 ± 0.25 −19.04 p48 56223.097 67.76 20.95 ± 0.20 −18.71 p60 56100.314 −36.58 20.59 ± 0.21 −19.07 p48 56226.095 70.31 21.28 ± 0.20 −18.38 p60 56100.344 −36.55 20.58 ± 0.23 −19.08 p48 56227.095 71.16 21.56 ± 0.32 −18.10 p60 56102.311 −34.88 20.64 ± 0.25 −19.02 p48 56228.093 72.01 21.30 ± 0.21 −18.36 p60 56102.341 −34.85 20.54 ± 0.29 −19.12 p48 56283.542 119.13 21.58 ± 0.23 −18.08 p60 56102.370 −34.83 20.46 ± 0.24 −19.20 p48 56289.544 124.23 22.12 ± 0.34 −17.54 p60 56104.303 −33.19 20.66 ± 0.24 −19.00 p48 56297.512 131.00 21.86 ± 0.27 −17.80 p60 56104.351 −33.14 20.43 ± 0.22 −19.23 p48 56300.487 133.52 21.61 ± 0.32 −18.05 p60 56104.380 −33.12 20.74 ± 0.30 −18.92 p48 56106.301 −31.49 20.35 ± 0.21 −19.31 p48 56106.340 −31.45 20.63 ± 0.24 −19.03 p48 56106.370 −31.43 20.30 ± 0.19 −19.36 p48 56108.297 −29.79 20.56 ± 0.23 −19.10 p48 56108.326 −29.77 20.52 ± 0.25 −19.14 p48 56108.356 −29.74 20.67 ± 0.28 −18.98 p48 56112.234 −26.45 20.46 ± 0.23 −19.20 p48 56112.264 −26.42 20.08 ± 0.21 −19.58 p48 56117.344 −22.10 20.24 ± 0.19 −19.42 p48 56117.376 −22.08 19.89 ± 0.17 −19.76 p48 56119.295 −20.45 20.15 ± 0.21 −19.51 p48 56123.328 −17.02 20.04 ± 0.16 −19.61 p48 56123.357 −16.99 19.96 ± 0.17 −19.70 p48 56124.273 −16.22 20.12 ± 0.16 −19.54 p48 56124.311 −16.18 19.98 ± 0.18 −19.68 p48 56124.353 −16.15 20.09 ± 0.21 −19.57 p48 56129.307 −11.94 19.88 ± 0.14 −19.78 p48 56129.336 −11.91 19.91 ± 0.16 −19.75 p48 56129.366 −11.89 19.92 ± 0.21 −19.74 p48 56133.287 −8.56 19.90 ± 0.14 −19.76 p48 56133.317 −8.53 19.99 ± 0.17 −19.67 p48 56133.347 −8.50 19.85 ± 0.15 −19.81 p48 56136.315 −5.98 20.18 ± 0.21 −19.48 p48 56136.345 −5.96 19.70 ± 0.18 −19.96 p48 56138.342 −4.26 19.59 ± 0.09 −20.07 p60 56159.275 13.53 19.93 ± 0.10 −19.73 p60 56166.257 19.46 20.12 ± 0.11 −19.54 p60 56166.263 19.47 20.05 ± 0.10 −19.61 p60 56177.167 28.73 19.96 ± 0.10 −19.70 p60 56185.173 35.53 20.19 ± 0.14 −19.47 p60

100 De Cia et al.

Table D50. PTF 12hni photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56146.255 −7.23 18.45 ± 0.09 r p48 56228.108 66.80 21.01 ± 0.25 r p60 56146.319 −7.18 18.52 ± 0.08 r p48 56228.177 66.86 21.16 ± 0.25 r p48 56147.229 −6.35 18.49 ± 0.08 r p48 56229.188 67.78 20.89 ± 0.27 r p48 56147.294 −6.30 18.53 ± 0.08 r p48 56231.104 69.51 20.47 ± 0.16 r p48 56148.232 −5.45 18.52 ± 0.08 r p48 56231.168 69.57 20.88 ± 0.25 r p48 56148.296 −5.39 18.74 ± 0.07 r p48 56232.155 70.46 20.43 ± 0.17 r p48 56151.485 −2.50 18.67 ± 0.07 r p60 56234.128 72.25 20.58 ± 0.17 i p60 56166.233 10.83 18.55 ± 0.07 r p48 56234.130 72.25 20.78 ± 0.15 r p60 56167.276 11.78 18.59 ± 0.08 r p48 56234.132 72.25 21.72 ± 0.32 B p60 56167.347 11.84 18.62 ± 0.07 r p48 56234.133 72.25 21.74 ± 0.23 g p60 56176.256 19.90 18.59 ± 0.08 i p60 56235.094 73.12 20.62 ± 0.17 i p60 56176.257 19.90 18.79 ± 0.08 r p60 56235.151 73.17 20.91 ± 0.16 r p60 56176.259 19.90 19.86 ± 0.16 B p60 56235.154 73.17 21.98 ± 0.27 g p60 56176.261 19.91 19.43 ± 0.10 g p60 56238.088 75.83 20.67 ± 0.19 i p60 56179.143 22.51 18.99 ± 0.25 i p60 56238.090 75.83 20.87 ± 0.18 r p60 56179.144 22.51 18.87 ± 0.19 i p60 56238.091 75.83 21.72 ± 0.34 B p60 56179.145 22.51 19.03 ± 0.16 r p60 56238.093 75.83 22.00 ± 0.29 g p60 56179.168 22.53 19.52 ± 0.11 g p60 56245.126 82.19 20.79 ± 0.19 i p60 56179.169 22.54 18.89 ± 0.09 r p60 56245.127 82.19 21.11 ± 0.19 r p60 56179.171 22.54 19.83 ± 0.16 B p60 56245.129 82.20 21.65 ± 0.31 B p60 56179.172 22.54 19.53 ± 0.10 g p60 56245.130 82.20 21.90 ± 0.27 g p60 56185.180 27.97 19.28 ± 0.09 i p60 56255.073 91.19 20.78 ± 0.27 i p60 56185.182 27.97 19.24 ± 0.09 i p60 56255.076 91.19 21.28 ± 0.29 r p60 56185.183 27.97 19.35 ± 0.09 r p60 56268.130 103.00 21.70 ± 0.27 g p60 56185.185 27.98 20.34 ± 0.17 B p60 56270.094 104.78 20.42 ± 0.17 i p60 56185.187 27.98 19.89 ± 0.10 g p60 56270.096 104.78 20.56 ± 0.16 r p60 56200.134 41.50 20.17 ± 0.25 i p60 56270.098 104.78 20.38 ± 0.16 i p60 56200.136 41.50 20.43 ± 0.25 r p60 56270.099 104.78 20.55 ± 0.16 r p60 56201.131 42.40 20.75 ± 0.34 g p60 56271.108 105.69 21.18 ± 0.28 g p60 56214.127 54.15 19.94 ± 0.12 i p60 56273.113 107.51 20.07 ± 0.14 i p60 56214.128 54.16 20.56 ± 0.13 r p60 56273.115 107.51 20.63 ± 0.17 r p60 56214.132 54.16 21.87 ± 0.26 g p60 56282.074 115.61 20.15 ± 0.19 i p60 56217.112 56.85 20.23 ± 0.15 i p60 56282.077 115.61 20.46 ± 0.18 r p60 56217.113 56.86 20.50 ± 0.16 r p60 56282.080 115.62 21.26 ± 0.27 g p60 56217.117 56.86 21.36 ± 0.25 g p60 56217.118 56.86 20.28 ± 0.16 i p60 56217.120 56.86 20.52 ± 0.15 r p60 56217.123 56.86 21.68 ± 0.27 g p60 56220.103 59.56 20.30 ± 0.14 i p60 56220.104 59.56 20.58 ± 0.13 r p60 56220.108 59.56 21.16 ± 0.18 g p60 56220.110 59.57 20.15 ± 0.13 i p60 56220.112 59.57 20.67 ± 0.13 r p60 56220.113 59.57 21.64 ± 0.29 B p60 56220.115 59.57 21.17 ± 0.17 g p60 56228.106 66.80 20.34 ± 0.20 i p60

PTF SLSN-I light curves 101

Table D51. PTF 12hni rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 56146.255 −7.23 18.44 ± 0.09 −20.00 p48 56146.319 −7.18 18.51 ± 0.08 −19.93 p48 56147.229 −6.35 18.48 ± 0.08 −19.96 p48 56147.294 −6.30 18.52 ± 0.08 −19.92 p48 56148.232 −5.45 18.51 ± 0.08 −19.93 p48 56148.296 −5.39 18.74 ± 0.07 −19.70 p48 56151.485 −2.50 18.68 ± 0.07 −19.76 p60 56166.233 10.83 18.62 ± 0.07 −19.82 p48 56167.276 11.78 18.66 ± 0.08 −19.79 p48 56167.347 11.84 18.68 ± 0.07 −19.76 p48 56176.257 19.90 18.89 ± 0.08 −19.55 p60 56179.145 22.51 19.14 ± 0.16 −19.30 p60 56179.169 22.54 19.00 ± 0.09 −19.44 p60 56185.183 27.97 19.48 ± 0.09 −18.96 p60 56200.136 41.50 20.59 ± 0.25 −17.85 p60 56214.128 54.16 20.75 ± 0.13 −17.69 p60 56217.113 56.86 20.70 ± 0.16 −17.74 p60 56217.120 56.86 20.73 ± 0.15 −17.72 p60 56220.104 59.56 20.79 ± 0.13 −17.65 p60 56220.112 59.57 20.87 ± 0.13 −17.57 p60 56228.108 66.80 21.23 ± 0.25 −17.21 p60 56228.177 66.86 21.38 ± 0.25 −17.06 p48 56229.188 67.78 21.12 ± 0.27 −17.33 p48 56231.104 69.51 20.69 ± 0.16 −17.75 p48 56231.168 69.57 21.11 ± 0.25 −17.34 p48 56232.155 70.46 20.65 ± 0.17 −17.79 p48 56234.130 72.25 21.01 ± 0.15 −17.43 p60 56235.151 73.17 21.14 ± 0.16 −17.30 p60 56238.090 75.83 21.10 ± 0.18 −17.34 p60 56245.127 82.19 21.35 ± 0.19 −17.09 p60 56255.076 91.19 21.53 ± 0.29 −16.91 p60 56270.096 104.78 20.83 ± 0.16 −17.62 p60 56270.099 104.78 20.81 ± 0.16 −17.63 p60 56273.115 107.51 20.89 ± 0.17 −17.55 p60 56282.077 115.61 20.73 ± 0.18 −17.71 p60

102 De Cia et al.

Table D52. PTF 12mxx photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56239.096 −39.96 21.19 ± 0.31 r p48 56283.800 −6.28 19.13 ± 0.07 g LT 56243.141 −36.91 20.56 ± 0.20 g p48 56283.800 −6.28 19.29 ± 0.09 r LT 56243.178 −36.89 20.74 ± 0.22 g p48 56283.800 −6.28 19.36 ± 0.10 i LT 56245.207 −35.36 20.49 ± 0.17 g p48 56284.180 −6.00 21.06 ± 0.62 UVW2 Swift/UVOT 56245.242 −35.33 20.38 ± 0.17 g p48 56284.186 −5.99 19.23 ± 0.14 r p60 56252.227 −30.07 20.17 ± 0.19 r p48 56284.188 −5.99 19.26 ± 0.29 u Swift/UVOT 56252.259 −30.04 20.34 ± 0.24 r p48 56284.191 −5.99 19.14 ± 0.19 B Swift/UVOT 56254.154 −28.62 20.34 ± 0.24 r p48 56284.191 −5.99 19.75 ± 0.35 UVW1 Swift/UVOT 56254.193 −28.59 19.94 ± 0.17 r p48 56284.195 −5.99 19.65 ± 0.32 UVM2 Swift/UVOT 56256.155 −27.11 19.84 ± 0.17 r p48 56284.195 −5.99 19.33 ± 0.17 B p60 56256.185 −27.09 19.72 ± 0.17 r p48 56284.196 −5.99 19.42 ± 0.25 z p60 56256.223 −27.06 19.82 ± 0.18 r p48 56284.198 −5.98 19.27 ± 0.13 g p60 56256.253 −27.04 19.75 ± 0.19 r p48 56284.614 −5.67 21.53 ± 0.34 UVW1 Swift/UVOT 56257.142 −26.37 19.58 ± 0.15 r p48 56284.616 −5.67 20.11 ± 0.20 u Swift/UVOT 56257.172 −26.34 19.69 ± 0.17 r p48 56284.617 −5.67 19.02 ± 0.15 B Swift/UVOT 56265.139 −20.34 19.64 ± 0.11 r p48 56284.618 −5.67 22.37 ± 0.36 UVW2 Swift/UVOT 56265.168 −20.32 19.53 ± 0.12 r p48 56284.622 −5.66 21.59 ± 0.31 UVM2 Swift/UVOT 56268.093 −18.12 19.59 ± 0.11 r p48 56287.061 −3.83 19.21 ± 0.09 g LCOGT 56268.122 −18.09 19.62 ± 0.11 r p48 56287.069 −3.82 19.08 ± 0.32 r LCOGT 56271.100 −15.85 19.44 ± 0.12 r p48 56287.075 −3.82 19.17 ± 0.01 i LCOGT 56271.130 −15.83 19.35 ± 0.12 r p48 56287.900 −3.19 19.32 ± 0.13 i LT 56281.800 −7.79 19.08 ± 0.11 g LT 56289.061 −2.32 19.25 ± 0.05 g LCOGT 56282.060 −7.59 19.16 ± 0.05 g LCOGT 56289.068 −2.31 19.23 ± 0.08 r LCOGT 56282.067 −7.59 19.24 ± 0.06 r LCOGT 56289.076 −2.31 19.32 ± 0.06 i LCOGT 56282.073 −7.58 19.29 ± 0.10 i LCOGT 56290.061 −1.57 19.21 ± 0.04 g LCOGT 56282.082 −7.58 19.49 ± 0.11 i p60 56290.068 −1.56 19.15 ± 0.08 r LCOGT 56282.084 −7.58 19.24 ± 0.09 r p60 56290.075 −1.56 19.32 ± 0.19 i LCOGT 56282.085 −7.58 19.25 ± 0.12 B p60 56290.900 −0.93 19.32 ± 0.08 i LT 56282.087 −7.57 19.15 ± 0.09 g p60 56290.900 −0.93 19.14 ± 0.08 g LT 56282.088 −7.57 19.40 ± 0.11 i p60 56290.900 −0.93 19.22 ± 0.08 r LT 56282.090 −7.57 19.27 ± 0.09 r p60 56291.061 −0.81 19.18 ± 0.04 g LCOGT 56282.092 −7.57 19.37 ± 0.13 B p60 56291.068 −0.81 19.18 ± 0.02 r LCOGT 56282.093 −7.57 19.21 ± 0.09 g p60 56291.075 −0.80 19.29 ± 0.02 i LCOGT 56282.095 −7.57 19.39 ± 0.11 i p60 56291.800 −0.26 19.25 ± 0.07 r LT 56282.096 −7.57 19.32 ± 0.09 r p60 56291.800 −0.26 19.39 ± 0.07 i LT 56282.098 −7.57 19.40 ± 0.14 B p60 56291.800 −0.26 19.20 ± 0.06 g LT 56282.100 −7.56 19.62 ± 0.22 z p60 56293.900 1.33 19.16 ± 0.13 r LT 56282.101 −7.56 19.12 ± 0.09 g p60 56293.900 1.33 19.34 ± 0.08 i LT 56282.103 −7.56 19.45 ± 0.11 i p60 56293.900 1.33 19.25 ± 0.07 g LT 56282.105 −7.56 19.30 ± 0.10 r p60 56295.061 2.20 19.30 ± 0.02 g LCOGT 56282.106 −7.56 19.32 ± 0.13 B p60 56295.068 2.21 19.22 ± 0.04 r LCOGT 56282.108 −7.56 19.24 ± 0.19 z p60 56295.075 2.21 19.26 ± 0.10 i LCOGT 56282.109 −7.56 19.20 ± 0.10 g p60 56295.800 2.76 19.27 ± 0.07 r LT 56283.061 −6.84 19.17 ± 0.04 g LCOGT 56295.800 2.76 19.22 ± 0.07 g LT 56283.068 −6.83 19.17 ± 0.06 r LCOGT 56295.800 2.76 19.36 ± 0.08 i LT 56283.074 −6.83 19.31 ± 0.06 i LCOGT 56296.800 3.51 19.23 ± 0.08 g LT

PTF SLSN-I light curves 103

Table D53. Continuation of Table D52. MJD Phase m Filter Telescope 56296.800 3.51 19.37 ± 0.08 i LT 56296.800 3.51 19.26 ± 0.07 r LT 56298.061 4.46 19.32 ± 0.08 g LCOGT 56298.068 4.47 19.25 ± 0.07 r LCOGT 56298.073 4.47 19.26 ± 0.09 i LCOGT 56300.061 5.97 19.35 ± 0.07 g LCOGT 56300.068 5.97 19.14 ± 0.03 r LCOGT 56300.074 5.98 19.19 ± 0.06 i LCOGT 56300.800 6.52 19.31 ± 0.07 g LT 56300.800 6.52 19.35 ± 0.07 i LT 56300.800 6.52 19.28 ± 0.07 r LT 56301.124 6.77 19.38 ± 0.10 i p60 56301.125 6.77 19.33 ± 0.09 r p60 56301.127 6.77 19.51 ± 0.12 B p60 56301.129 6.77 19.15 ± 0.17 z p60 56301.130 6.77 19.38 ± 0.09 g p60 56303.800 8.78 19.35 ± 0.07 r LT 56303.800 8.78 19.40 ± 0.07 g LT 56303.800 8.78 19.42 ± 0.09 i LT 56308.061 11.99 19.63 ± 0.05 g LCOGT 56308.068 12.00 19.33 ± 0.05 r LCOGT 56308.074 12.00 19.48 ± 0.10 i LCOGT 56308.800 12.55 19.44 ± 0.08 i LT 56308.800 12.55 19.53 ± 0.08 g LT 56308.800 12.55 19.38 ± 0.08 r LT

104 De Cia et al.

Table D54. PTF 12mxx rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 56239.096 −39.96 21.53 ± 0.31 −19.64 p48 56252.227 −30.07 20.51 ± 0.19 −20.66 p48 56252.259 −30.04 20.69 ± 0.24 −20.49 p48 56254.154 −28.62 20.69 ± 0.24 −20.49 p48 56254.193 −28.59 20.29 ± 0.17 −20.89 p48 56256.155 −27.11 20.19 ± 0.17 −20.98 p48 56256.185 −27.09 20.07 ± 0.17 −21.11 p48 56256.223 −27.06 20.16 ± 0.18 −21.01 p48 56256.253 −27.04 20.10 ± 0.19 −21.08 p48 56257.142 −26.37 19.93 ± 0.15 −21.24 p48 56257.172 −26.34 20.04 ± 0.17 −21.14 p48 56265.139 −20.34 20.00 ± 0.11 −21.17 p48 56265.168 −20.32 19.89 ± 0.12 −21.29 p48 56268.093 −18.12 19.96 ± 0.11 −21.22 p48 56268.122 −18.09 19.99 ± 0.11 −21.19 p48 56271.100 −15.85 19.81 ± 0.12 −21.36 p48 56271.130 −15.83 19.72 ± 0.12 −21.46 p48 56282.067 −7.59 19.61 ± 0.06 −21.57 LCOGT 56282.084 −7.58 19.62 ± 0.09 −21.56 p60 56282.090 −7.57 19.65 ± 0.09 −21.53 p60 56282.096 −7.57 19.71 ± 0.09 −21.47 p60 56282.105 −7.56 19.68 ± 0.10 −21.49 p60 56283.068 −6.83 19.54 ± 0.06 −21.64 LCOGT 56283.800 −6.28 19.65 ± 0.09 −21.52 LT 56284.186 −5.99 19.62 ± 0.14 −21.56 p60 56287.069 −3.82 19.45 ± 0.32 −21.72 LCOGT 56289.068 −2.31 19.60 ± 0.08 −21.58 LCOGT 56290.068 −1.56 19.53 ± 0.08 −21.65 LCOGT 56290.900 −0.93 19.59 ± 0.08 −21.59 LT 56291.068 −0.81 19.56 ± 0.02 −21.62 LCOGT 56291.800 −0.26 19.62 ± 0.07 −21.55 LT 56293.900 1.33 19.54 ± 0.13 −21.64 LT 56295.068 2.21 19.60 ± 0.04 −21.58 LCOGT 56295.800 2.76 19.65 ± 0.07 −21.53 LT 56296.800 3.51 19.64 ± 0.07 −21.53 LT 56298.068 4.47 19.63 ± 0.07 −21.54 LCOGT 56300.068 5.97 19.52 ± 0.03 −21.65 LCOGT 56300.800 6.52 19.67 ± 0.07 −21.51 LT 56301.125 6.77 19.73 ± 0.09 −21.45 p60 56303.800 8.78 19.73 ± 0.07 −21.44 LT 56308.068 12.00 19.73 ± 0.05 −21.45 LCOGT 56308.800 12.55 19.78 ± 0.08 −21.40 LT

PTF SLSN-I light curves 105

Table D55. PTF 13ajg photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56362.453 −27.52 21.13 ± 0.25 r p48 56399.440 −6.27 20.39 ± 0.15 r p48 56362.512 −27.49 21.03 ± 0.22 r p48 56400.346 −5.75 20.27 ± 0.17 r p48 56363.426 −26.96 21.07 ± 0.27 r p48 56400.377 −5.73 20.20 ± 0.16 r p48 56363.455 −26.95 21.34 ± 0.34 r p48 56400.407 −5.71 20.23 ± 0.14 r p48 56363.484 −26.93 21.12 ± 0.23 r p48 56401.383 −5.15 20.46 ± 0.15 r p48 56365.544 −25.75 20.84 ± 0.28 r p48 56401.413 −5.14 20.28 ± 0.15 r p48 56369.418 −23.52 21.26 ± 0.29 r p48 56401.443 −5.12 20.21 ± 0.14 r p48 56369.448 −23.50 20.89 ± 0.20 r p48 56402.354 −4.60 20.16 ± 0.16 r p48 56369.477 −23.49 21.24 ± 0.23 r p48 56402.384 −4.58 20.03 ± 0.14 r p48 56370.519 −22.89 21.17 ± 0.31 r p48 56402.414 −4.56 20.15 ± 0.15 r p48 56374.414 −20.65 20.56 ± 0.22 r p48 56403.353 −4.02 20.13 ± 0.16 r p48 56374.444 −20.63 21.03 ± 0.28 r p48 56403.382 −4.00 20.24 ± 0.13 r p48 56374.474 −20.62 20.80 ± 0.21 r p48 56403.412 −3.99 20.38 ± 0.18 r p48 56375.416 −20.07 21.15 ± 0.36 r p48 56404.351 −3.45 20.22 ± 0.18 r p48 56375.446 −20.06 20.90 ± 0.24 r p48 56404.381 −3.43 20.27 ± 0.14 r p48 56375.475 −20.04 20.67 ± 0.23 r p48 56404.410 −3.41 20.22 ± 0.13 r p48 56376.421 −19.50 20.76 ± 0.24 r p48 56405.362 −2.87 20.05 ± 0.19 r p48 56376.451 −19.48 20.72 ± 0.22 r p48 56405.392 −2.85 20.02 ± 0.19 r p48 56376.481 −19.46 20.48 ± 0.21 r p48 56405.435 −2.83 20.37 ± 0.23 r p48 56382.381 −16.07 20.56 ± 0.26 r p48 56412.345 1.15 20.09 ± 0.17 r p48 56382.412 −16.05 20.43 ± 0.23 r p48 56412.375 1.16 20.02 ± 0.15 r p48 56385.371 −14.35 20.61 ± 0.21 r p48 56412.404 1.18 20.50 ± 0.21 r p48 56385.401 −14.34 20.44 ± 0.17 r p48 56413.359 1.73 20.40 ± 0.17 r p48 56385.431 −14.32 20.44 ± 0.20 r p48 56413.389 1.75 20.17 ± 0.16 r p48 56386.337 −13.80 20.27 ± 0.16 r p48 56413.419 1.76 20.01 ± 0.15 r p48 56386.366 −13.78 20.54 ± 0.16 r p48 56414.457 2.36 20.15 ± 0.16 r p48 56387.367 −13.21 20.56 ± 0.21 r p48 56415.258 2.82 20.13 ± 0.16 r p48 56387.397 −13.19 20.85 ± 0.20 r p48 56415.385 2.89 20.17 ± 0.16 r p48 56387.427 −13.17 20.22 ± 0.13 r p48 56415.415 2.91 20.20 ± 0.16 r p48 56388.484 −12.57 20.34 ± 0.15 r p48 56416.317 3.43 20.40 ± 0.17 r p48 56388.514 −12.55 20.45 ± 0.18 r p48 56416.350 3.45 20.13 ± 0.12 r p48 56389.359 −12.06 20.49 ± 0.16 r p48 56416.384 3.47 20.39 ± 0.13 r p48 56389.389 −12.05 20.42 ± 0.16 r p48 56417.286 3.98 20.28 ± 0.15 r p48 56389.419 −12.03 20.41 ± 0.15 r p48 56417.325 4.01 20.24 ± 0.15 r p48 56390.439 −11.44 20.41 ± 0.19 r p48 56417.362 4.03 20.29 ± 0.15 r p48 56392.331 −10.35 20.66 ± 0.23 r p48 56422.356 6.90 20.23 ± 0.13 r p48 56392.360 −10.34 20.53 ± 0.21 r p48 56422.402 6.92 20.15 ± 0.12 r p48 56392.389 −10.32 20.67 ± 0.23 r p48 56422.433 6.94 20.53 ± 0.18 r p48 56394.349 −9.20 20.50 ± 0.17 r p48 56423.335 7.46 20.03 ± 0.13 r p48 56395.301 −8.65 20.33 ± 0.15 r p48 56423.365 7.48 20.40 ± 0.14 r p48 56395.330 −8.63 20.10 ± 0.13 r p48 56423.395 7.49 20.42 ± 0.16 r p48 56396.294 −8.08 20.31 ± 0.14 r p48 56424.297 8.01 20.23 ± 0.14 r p48 56396.324 −8.06 20.40 ± 0.17 r p48 56424.332 8.03 20.32 ± 0.13 r p48 56396.355 −8.04 20.23 ± 0.14 r p48 56424.370 8.06 20.27 ± 0.13 r p48 56399.364 −6.31 20.30 ± 0.17 r p48 56425.272 8.57 20.41 ± 0.15 r p48 56399.409 −6.29 20.40 ± 0.17 r p48 56425.363 8.63 20.29 ± 0.11 r p48

106 De Cia et al.

Table D56. Continuation of Table D55.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56425.394 8.64 20.34 ± 0.15 r p48 56452.281 24.09 21.09 ± 0.20 r p48 56426.295 9.16 20.24 ± 0.15 r p48 56453.208 24.63 20.97 ± 0.23 r p48 56426.373 9.21 20.43 ± 0.15 r p48 56453.277 24.67 21.12 ± 0.21 r p48 56426.404 9.22 20.35 ± 0.15 r p48 56454.210 25.20 21.07 ± 0.22 r p48 56427.306 9.74 20.42 ± 0.18 r p48 56454.276 25.24 21.60 ± 0.33 r p48 56427.335 9.76 20.34 ± 0.16 r p48 56455.190 25.76 21.15 ± 0.22 r p48 56427.367 9.78 20.75 ± 0.18 r p48 56455.279 25.82 21.54 ± 0.18 r p48 56428.269 10.30 20.65 ± 0.20 r p48 56456.204 26.35 21.22 ± 0.23 r p48 56428.322 10.33 20.42 ± 0.15 r p48 56456.283 26.39 21.61 ± 0.29 r p48 56428.371 10.35 20.24 ± 0.14 r p48 56457.196 26.92 21.35 ± 0.29 r p48 56431.364 12.07 20.78 ± 0.20 r p48 56457.270 26.96 21.56 ± 0.30 r p48 56431.404 12.10 20.32 ± 0.14 r p48 56458.202 27.50 21.85 ± 0.31 r p48 56431.434 12.11 20.59 ± 0.17 r p48 56458.269 27.53 21.42 ± 0.21 r p48 56432.336 12.63 20.66 ± 0.22 r p48 56459.193 28.06 21.43 ± 0.29 r p48 56432.369 12.65 20.67 ± 0.24 r p48 56459.277 28.11 21.35 ± 0.26 r p48 56432.405 12.67 20.42 ± 0.14 r p48 56460.207 28.65 21.08 ± 0.28 r p48 56433.306 13.19 20.52 ± 0.22 r p48 56461.194 29.21 21.00 ± 0.25 r p48 56433.363 13.22 20.76 ± 0.25 r p48 56461.251 29.25 21.20 ± 0.27 r p48 56433.392 13.24 20.21 ± 0.15 r p48 56462.214 29.80 21.51 ± 0.34 r p48 56434.294 13.76 20.62 ± 0.26 r p48 56463.243 30.39 21.21 ± 0.35 r p48 56434.343 13.79 20.41 ± 0.25 r p48 56469.185 33.81 21.67 ± 0.30 r p48 56434.372 13.80 20.25 ± 0.18 r p48 56469.224 33.83 21.00 ± 0.20 r p48 56440.358 17.24 20.43 ± 0.27 r p48 56471.206 34.97 21.60 ± 0.31 r p48 56440.393 17.26 20.54 ± 0.30 r p48 56471.243 34.99 21.43 ± 0.25 r p48 56441.350 17.81 20.77 ± 0.30 r p48 56472.230 35.56 20.92 ± 0.22 r p48 56442.335 18.38 20.79 ± 0.23 r p48 56474.203 36.69 21.37 ± 0.29 r p48 56442.468 18.45 20.76 ± 0.22 r p48 56477.315 38.48 21.26 ± 0.21 r p48 56443.384 18.98 21.06 ± 0.23 r p48 56486.243 43.61 22.03 ± 0.30 r p48 56443.419 19.00 21.32 ± 0.28 r p48 56488.327 44.81 21.51 ± 0.34 r p48 56444.321 19.52 21.03 ± 0.23 r p48 56444.355 19.54 21.04 ± 0.26 r p48 56445.257 20.06 20.97 ± 0.16 r p48 56445.307 20.09 21.20 ± 0.20 r p48 56446.211 20.61 20.87 ± 0.17 r p48 56446.286 20.65 20.93 ± 0.17 r p48 56447.219 21.18 21.43 ± 0.21 r p48 56447.291 21.23 21.16 ± 0.17 r p48 56448.217 21.76 21.06 ± 0.20 r p48 56448.291 21.80 21.11 ± 0.20 r p48 56449.204 22.33 21.35 ± 0.24 r p48 56449.276 22.37 21.18 ± 0.18 r p48 56450.222 22.91 21.34 ± 0.28 r p48 56450.283 22.95 20.90 ± 0.14 r p48 56451.207 23.48 20.77 ± 0.17 r p48 56451.277 23.52 20.99 ± 0.19 r p48 56452.209 24.05 20.95 ± 0.20 r p48

PTF SLSN-I light curves 107

Table D57. PTF 13ajg rest-frame g photometry data.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 56362.453 −27.52 22.05 ± 0.25 −21.24 p48 56399.409 −6.29 21.13 ± 0.17 −22.17 p48 56362.512 −27.49 21.95 ± 0.22 −21.35 p48 56399.440 −6.27 21.12 ± 0.15 −22.18 p48 56363.426 −26.96 22.00 ± 0.27 −21.30 p48 56400.346 −5.75 21.00 ± 0.17 −22.30 p48 56363.455 −26.95 22.26 ± 0.34 −21.03 p48 56400.377 −5.73 20.93 ± 0.16 −22.36 p48 56363.484 −26.93 22.04 ± 0.23 −21.26 p48 56400.407 −5.71 20.95 ± 0.14 −22.34 p48 56365.544 −25.75 21.77 ± 0.28 −21.53 p48 56401.383 −5.15 21.18 ± 0.15 −22.12 p48 56369.418 −23.52 22.16 ± 0.29 −21.13 p48 56401.413 −5.14 21.00 ± 0.15 −22.29 p48 56369.448 −23.50 21.79 ± 0.20 −21.50 p48 56401.443 −5.12 20.93 ± 0.14 −22.36 p48 56369.477 −23.49 22.14 ± 0.23 −21.16 p48 56402.354 −4.60 20.88 ± 0.16 −22.41 p48 56370.519 −22.89 22.06 ± 0.31 −21.24 p48 56402.384 −4.58 20.75 ± 0.14 −22.55 p48 56374.414 −20.65 21.43 ± 0.22 −21.87 p48 56402.414 −4.56 20.87 ± 0.15 −22.43 p48 56374.444 −20.63 21.89 ± 0.28 −21.40 p48 56403.353 −4.02 20.84 ± 0.16 −22.46 p48 56374.474 −20.62 21.67 ± 0.21 −21.62 p48 56403.382 −4.00 20.95 ± 0.13 −22.34 p48 56375.416 −20.07 22.01 ± 0.36 −21.29 p48 56403.412 −3.99 21.09 ± 0.18 −22.21 p48 56375.446 −20.06 21.76 ± 0.24 −21.53 p48 56404.351 −3.45 20.93 ± 0.18 −22.36 p48 56375.475 −20.04 21.53 ± 0.23 −21.77 p48 56404.381 −3.43 20.98 ± 0.14 −22.32 p48 56376.421 −19.50 21.62 ± 0.24 −21.67 p48 56404.410 −3.41 20.93 ± 0.13 −22.36 p48 56376.451 −19.48 21.58 ± 0.22 −21.72 p48 56405.362 −2.87 20.75 ± 0.19 −22.55 p48 56376.481 −19.46 21.34 ± 0.21 −21.96 p48 56405.392 −2.85 20.73 ± 0.19 −22.57 p48 56382.381 −16.07 21.38 ± 0.26 −21.92 p48 56405.435 −2.83 21.08 ± 0.23 −22.22 p48 56382.412 −16.05 21.25 ± 0.23 −22.04 p48 56412.345 1.15 20.76 ± 0.17 −22.53 p48 56385.371 −14.35 21.42 ± 0.21 −21.88 p48 56412.375 1.16 20.69 ± 0.15 −22.60 p48 56385.401 −14.34 21.24 ± 0.17 −22.06 p48 56412.400 1.18 20.80 ± 0.06 −22.49 P60 V 56385.431 −14.32 21.24 ± 0.20 −22.06 p48 56412.404 1.18 21.17 ± 0.21 −22.13 p48 56386.337 −13.80 21.07 ± 0.16 −22.22 p48 56413.359 1.73 21.06 ± 0.17 −22.24 p48 56386.366 −13.78 21.34 ± 0.16 −21.95 p48 56413.389 1.75 20.84 ± 0.16 −22.46 p48 56387.367 −13.21 21.35 ± 0.21 −21.95 p48 56413.419 1.76 20.67 ± 0.15 −22.63 p48 56387.397 −13.19 21.64 ± 0.20 −21.66 p48 56414.457 2.36 20.82 ± 0.16 −22.48 p48 56387.427 −13.17 21.01 ± 0.13 −22.28 p48 56415.258 2.82 20.78 ± 0.16 −22.52 p48 56388.484 −12.57 21.13 ± 0.15 −22.17 p48 56415.385 2.89 20.82 ± 0.16 −22.47 p48 56388.514 −12.55 21.24 ± 0.18 −22.06 p48 56415.415 2.91 20.85 ± 0.16 −22.44 p48 56389.359 −12.06 21.27 ± 0.16 −22.03 p48 56416.317 3.43 21.05 ± 0.17 −22.25 p48 56389.389 −12.05 21.20 ± 0.16 −22.09 p48 56416.350 3.45 20.78 ± 0.12 −22.51 p48 56389.419 −12.03 21.19 ± 0.15 −22.11 p48 56416.384 3.47 21.04 ± 0.13 −22.25 p48 56390.439 −11.44 21.19 ± 0.19 −22.10 p48 56417.286 3.98 20.93 ± 0.15 −22.37 p48 56392.331 −10.35 21.44 ± 0.23 −21.86 p48 56417.325 4.01 20.89 ± 0.15 −22.41 p48 56392.360 −10.34 21.30 ± 0.21 −22.00 p48 56417.362 4.03 20.94 ± 0.15 −22.36 p48 56392.389 −10.32 21.44 ± 0.23 −21.86 p48 56418.100 4.45 20.92 ± 0.01 −22.38 NOT V 56394.349 −9.20 21.25 ± 0.17 −22.04 p48 56422.356 6.90 20.85 ± 0.13 −22.44 p48 56395.300 −8.65 21.05 ± 0.05 −22.25 P60 V 56422.402 6.92 20.77 ± 0.12 −22.52 p48 56395.301 −8.65 21.09 ± 0.15 −22.21 p48 56422.433 6.94 21.15 ± 0.18 −22.14 p48 56395.330 −8.63 20.85 ± 0.13 −22.44 p48 56423.335 7.46 20.66 ± 0.13 −22.64 p48 56396.294 −8.08 21.06 ± 0.14 −22.24 p48 56423.365 7.48 21.03 ± 0.14 −22.27 p48 56396.324 −8.06 21.15 ± 0.17 −22.14 p48 56423.395 7.49 21.05 ± 0.16 −22.25 p48 56396.355 −8.04 20.97 ± 0.14 −22.32 p48 56423.400 7.50 20.93 ± 0.05 −22.37 P60 V 56399.364 −6.31 21.03 ± 0.17 −22.27 p48 56424.297 8.01 20.84 ± 0.14 −22.45 p48

108 De Cia et al.

Table D58. Continuation of Table D57.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 56424.332 8.03 20.93 ± 0.13 −22.36 p48 56447.291 21.23 21.69 ± 0.17 −21.60 p48 56424.370 8.06 20.89 ± 0.13 −22.41 p48 56448.217 21.76 21.59 ± 0.20 −21.71 p48 56425.272 8.57 21.03 ± 0.15 −22.27 p48 56448.291 21.80 21.63 ± 0.20 −21.67 p48 56425.363 8.63 20.91 ± 0.11 −22.39 p48 56449.204 22.33 21.87 ± 0.24 −21.42 p48 56425.394 8.64 20.95 ± 0.15 −22.34 p48 56449.276 22.37 21.71 ± 0.18 −21.59 p48 56426.295 9.16 20.85 ± 0.15 −22.45 p48 56449.300 22.38 21.77 ± 0.06 −21.53 P60 V 56426.373 9.21 21.04 ± 0.15 −22.26 p48 56450.222 22.91 21.85 ± 0.28 −21.44 p48 56426.404 9.22 20.96 ± 0.15 −22.33 p48 56450.283 22.95 21.42 ± 0.14 −21.88 p48 56427.306 9.74 21.02 ± 0.18 −22.27 p48 56451.207 23.48 21.29 ± 0.17 −22.00 p48 56427.335 9.76 20.94 ± 0.16 −22.36 p48 56451.277 23.52 21.51 ± 0.19 −21.78 p48 56427.367 9.78 21.35 ± 0.18 −21.95 p48 56452.209 24.05 21.47 ± 0.20 −21.83 p48 56428.269 10.30 21.26 ± 0.20 −22.04 p48 56452.281 24.09 21.60 ± 0.20 −21.70 p48 56428.322 10.33 21.02 ± 0.15 −22.27 p48 56453.208 24.63 21.48 ± 0.23 −21.82 p48 56428.371 10.35 20.84 ± 0.14 −22.46 p48 56453.277 24.67 21.63 ± 0.21 −21.67 p48 56430.100 11.35 21.13 ± 0.02 −22.17 NOT V 56454.210 25.20 21.57 ± 0.22 −21.72 p48 56431.364 12.07 21.37 ± 0.20 −21.93 p48 56454.276 25.24 22.11 ± 0.33 −21.19 p48 56431.400 12.09 21.02 ± 0.07 −22.28 P60 V 56455.190 25.76 21.65 ± 0.22 −21.65 p48 56431.404 12.10 20.91 ± 0.14 −22.38 p48 56455.279 25.82 22.05 ± 0.18 −21.25 p48 56431.434 12.11 21.18 ± 0.17 −22.11 p48 56455.400 25.89 21.97 ± 0.22 −21.32 P60 V 56432.300 12.61 21.17 ± 0.06 −22.13 P60 V 56456.200 26.35 21.98 ± 0.10 −21.31 P60 V 56432.336 12.63 21.25 ± 0.22 −22.04 p48 56456.204 26.35 21.72 ± 0.23 −21.58 p48 56432.369 12.65 21.26 ± 0.24 −22.04 p48 56456.283 26.39 22.11 ± 0.29 −21.18 p48 56432.405 12.67 21.00 ± 0.14 −22.29 p48 56457.196 26.92 21.84 ± 0.29 −21.45 p48 56433.300 13.19 21.31 ± 0.12 −21.98 P60 V 56457.270 26.96 22.05 ± 0.30 −21.24 p48 56433.306 13.19 21.10 ± 0.22 −22.20 p48 56458.202 27.50 22.34 ± 0.31 −20.95 p48 56433.363 13.22 21.34 ± 0.25 −21.95 p48 56458.269 27.53 21.92 ± 0.21 −21.38 p48 56433.392 13.24 20.79 ± 0.15 −22.50 p48 56459.193 28.06 21.92 ± 0.29 −21.38 p48 56434.294 13.76 21.20 ± 0.26 −22.10 p48 56459.277 28.11 21.84 ± 0.26 −21.46 p48 56434.343 13.79 20.99 ± 0.25 −22.31 p48 56460.207 28.65 21.57 ± 0.28 −21.73 p48 56434.372 13.80 20.83 ± 0.18 −22.47 p48 56461.194 29.21 21.49 ± 0.25 −21.81 p48 56440.300 17.21 21.64 ± 0.22 −21.66 P60 V 56461.251 29.25 21.68 ± 0.27 −21.61 p48 56440.358 17.24 20.99 ± 0.27 −22.31 p48 56462.214 29.80 21.99 ± 0.34 −21.31 p48 56440.393 17.26 21.10 ± 0.30 −22.20 p48 56463.243 30.39 21.69 ± 0.35 −21.61 p48 56441.350 17.81 21.32 ± 0.30 −21.98 p48 56469.185 33.81 22.13 ± 0.30 −21.17 p48 56442.335 18.38 21.34 ± 0.23 −21.96 p48 56469.224 33.83 21.46 ± 0.20 −21.84 p48 56442.468 18.45 21.31 ± 0.22 −21.99 p48 56469.300 33.87 22.53 ± 0.35 −20.77 P60 V 56443.200 18.88 21.55 ± 0.13 −21.74 P60 V 56470.300 34.45 21.97 ± 0.13 −21.33 P60 V 56443.384 18.98 21.61 ± 0.23 −21.69 p48 56471.206 34.97 22.06 ± 0.31 −21.24 p48 56443.419 19.00 21.86 ± 0.28 −21.43 p48 56471.243 34.99 21.89 ± 0.25 −21.41 p48 56444.321 19.52 21.58 ± 0.23 −21.72 p48 56472.230 35.56 21.37 ± 0.22 −21.93 p48 56444.355 19.54 21.59 ± 0.26 −21.71 p48 56474.203 36.69 21.82 ± 0.29 −21.48 p48 56445.257 20.06 21.51 ± 0.16 −21.79 p48 56477.000 38.30 22.42 ± 0.05 −20.88 NOT V 56445.307 20.09 21.74 ± 0.20 −21.56 p48 56477.315 38.48 21.70 ± 0.21 −21.59 p48 56446.211 20.61 21.41 ± 0.17 −21.89 p48 56479.300 39.62 22.52 ± 0.25 −20.78 P60 V 56446.286 20.65 21.46 ± 0.17 −21.83 p48 56480.200 40.14 22.14 ± 0.14 −21.16 P60 V 56447.219 21.18 21.96 ± 0.21 −21.34 p48 56486.243 43.61 22.44 ± 0.30 −20.85 p48

PTF SLSN-I light curves 109

Table D59. Continuation of Table D57.

MJD Phase mg Mg Telescope Reference 56488.327 44.81 21.91 ± 0.34 −21.38 p48 56544.300 76.97 24.04 ± 0.08 −19.25 Keck V 56776.600 210.45 25.14 ± 0.09 −18.15 Keck V 56869.400 263.78 26.40 ± 0.22 −16.89 Keck V

110 De Cia et al.

Table D60. PTF 13bdl photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56387.271 −75.52 21.48 ± 0.30 r p48 56470.235 −16.38 20.86 ± 0.17 i p60 56390.286 −73.37 21.54 ± 0.33 r p48 56470.237 −16.38 21.01 ± 0.17 r p60 56414.258 −56.28 21.19 ± 0.26 r p48 56470.241 −16.38 21.92 ± 0.30 g p60 56415.281 −55.55 21.63 ± 0.36 r p48 56471.196 −15.70 21.58 ± 0.21 g p60 56416.218 −54.89 21.54 ± 0.30 r p48 56474.217 −13.55 21.25 ± 0.31 g p60 56416.248 −54.86 21.56 ± 0.32 r p48 56480.206 −9.28 20.69 ± 0.16 i p60 56416.277 −54.84 21.41 ± 0.28 r p48 56480.209 −9.28 20.84 ± 0.17 r p60 56417.185 −54.20 21.24 ± 0.25 r p48 56480.213 −9.27 22.14 ± 0.34 g p60 56417.252 −54.15 21.21 ± 0.25 r p48 56490.219 −2.14 20.73 ± 0.23 i p60 56423.224 −49.89 21.48 ± 0.30 r p48 56490.221 −2.14 21.20 ± 0.30 r p60 56423.253 −49.87 21.08 ± 0.25 r p48 56423.283 −49.85 21.19 ± 0.24 r p48 56424.184 −49.21 20.99 ± 0.21 r p48 56424.188 −49.21 20.95 ± 0.19 r p48 56424.239 −49.17 21.65 ± 0.31 r p48 56424.269 −49.15 21.05 ± 0.24 r p48 56425.198 −48.49 21.68 ± 0.33 r p48 56425.207 −48.48 21.43 ± 0.24 r p48 56425.234 −48.46 20.89 ± 0.20 r p48 56425.282 −48.43 21.19 ± 0.25 r p48 56426.214 −47.76 21.25 ± 0.29 r p48 56426.244 −47.74 21.17 ± 0.24 r p48 56426.274 −47.72 21.12 ± 0.25 r p48 56427.195 −47.06 21.16 ± 0.27 r p48 56427.237 −47.03 21.15 ± 0.33 r p48 56427.276 −47.00 21.47 ± 0.34 r p48 56428.177 −46.36 21.01 ± 0.26 r p48 56428.239 −46.32 21.14 ± 0.25 r p48 56428.279 −46.29 21.41 ± 0.35 r p48 56429.287 −45.57 21.40 ± 0.36 r p48 56444.230 −34.92 20.77 ± 0.21 r p48 56444.237 −34.91 20.96 ± 0.22 r p48 56444.265 −34.89 20.86 ± 0.25 r p48 56445.220 −34.21 20.96 ± 0.22 r p48 56445.262 −34.18 21.24 ± 0.27 r p48 56449.282 −31.32 21.17 ± 0.21 r p60 56450.329 −30.57 20.80 ± 0.23 i p60 56450.332 −30.57 21.61 ± 0.32 g p60 56451.313 −29.87 20.85 ± 0.19 i p60 56452.312 −29.16 21.32 ± 0.24 g p60 56453.282 −28.47 21.20 ± 0.21 g p60 56456.201 −26.39 21.02 ± 0.14 r p60 56457.195 −25.68 21.06 ± 0.20 i p60 56457.197 −25.68 21.72 ± 0.33 B p60 56462.282 −22.05 20.66 ± 0.29 r p60 56469.272 −17.07 21.03 ± 0.29 i p60

PTF SLSN-I light curves 111

Table D61. PTF 13bdl rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 56387.271 −75.52 21.95 ± 0.30 −19.75 p48 56390.286 −73.37 22.01 ± 0.33 −19.69 p48 56414.258 −56.28 21.65 ± 0.26 −20.05 p48 56415.281 −55.55 22.09 ± 0.36 −19.61 p48 56416.218 −54.89 22.01 ± 0.30 −19.70 p48 56416.248 −54.86 22.02 ± 0.32 −19.68 p48 56416.277 −54.84 21.87 ± 0.28 −19.83 p48 56417.185 −54.20 21.70 ± 0.25 −20.00 p48 56417.252 −54.15 21.67 ± 0.25 −20.03 p48 56423.224 −49.89 21.95 ± 0.30 −19.75 p48 56423.253 −49.87 21.55 ± 0.25 −20.15 p48 56423.283 −49.85 21.65 ± 0.24 −20.05 p48 56424.184 −49.21 21.46 ± 0.21 −20.24 p48 56424.188 −49.21 21.42 ± 0.19 −20.29 p48 56424.239 −49.17 22.11 ± 0.31 −19.59 p48 56424.269 −49.15 21.52 ± 0.24 −20.19 p48 56425.198 −48.49 22.15 ± 0.33 −19.55 p48 56425.207 −48.48 21.89 ± 0.24 −19.81 p48 56425.234 −48.46 21.36 ± 0.20 −20.35 p48 56425.282 −48.43 21.65 ± 0.25 −20.05 p48 56426.214 −47.76 21.71 ± 0.29 −19.99 p48 56426.244 −47.74 21.64 ± 0.24 −20.06 p48 56426.274 −47.72 21.58 ± 0.25 −20.12 p48 56427.195 −47.06 21.62 ± 0.27 −20.08 p48 56427.237 −47.03 21.61 ± 0.33 −20.09 p48 56427.276 −47.00 21.94 ± 0.34 −19.76 p48 56428.177 −46.36 21.48 ± 0.26 −20.22 p48 56428.239 −46.32 21.60 ± 0.25 −20.10 p48 56428.279 −46.29 21.88 ± 0.35 −19.83 p48 56429.287 −45.57 21.87 ± 0.36 −19.84 p48 56444.230 −34.92 21.23 ± 0.21 −20.47 p48 56444.237 −34.91 21.43 ± 0.22 −20.27 p48 56444.265 −34.89 21.33 ± 0.25 −20.37 p48 56445.220 −34.21 21.43 ± 0.22 −20.27 p48 56445.262 −34.18 21.70 ± 0.27 −20.00 p48 56449.282 −31.32 21.64 ± 0.21 −20.07 p60 56456.201 −26.39 21.49 ± 0.14 −20.22 p60 56462.282 −22.05 21.13 ± 0.29 −20.58 p60 56470.237 −16.38 21.48 ± 0.17 −20.23 p60 56480.209 −9.28 21.31 ± 0.17 −20.40 p60 56490.221 −2.14 21.66 ± 0.30 −20.04 p60

112 De Cia et al.

Table D62. PTF 13bjz photometry data.

MJD Phase m Filter Telescope 56424.171 −11.01 20.97 ± 0.13 r p48 56425.163 −10.23 20.43 ± 0.12 r p48 56426.181 −9.43 20.50 ± 0.17 r p48 56427.163 −8.66 20.29 ± 0.16 r p48 56428.206 −7.84 20.26 ± 0.13 r p48 56433.197 −3.91 19.73 ± 0.13 r p48 56434.213 −3.11 19.58 ± 0.10 r p48 56443.178 3.94 19.55 ± 0.10 r p48 56443.179 3.94 19.90 ± 0.11 r p48 56443.237 3.98 19.70 ± 0.13 r p48 56443.250 3.99 20.02 ± 0.15 r p48 56444.170 4.72 19.98 ± 0.12 r p48 56444.171 4.72 19.86 ± 0.09 r p48 56444.270 4.80 19.72 ± 0.15 r p48 56444.271 4.80 19.74 ± 0.15 r p48 56445.173 5.51 19.67 ± 0.09 r p48 56445.174 5.51 19.55 ± 0.10 r p48 56445.282 5.59 20.13 ± 0.12 r p48

Table D63. PTF 13bjz rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 56424.171 −11.01 21.27 ± 0.13 −19.43 p48 56425.163 −10.23 20.73 ± 0.12 −19.97 p48 56426.181 −9.43 20.80 ± 0.17 −19.90 p48 56427.163 −8.66 20.59 ± 0.16 −20.11 p48 56428.206 −7.84 20.57 ± 0.13 −20.14 p48 56433.197 −3.91 20.05 ± 0.13 −20.66 p48 56434.213 −3.11 19.90 ± 0.10 −20.80 p48 56443.178 3.94 19.89 ± 0.10 −20.81 p48 56443.179 3.94 20.24 ± 0.11 −20.47 p48 56443.237 3.98 20.04 ± 0.13 −20.66 p48 56443.250 3.99 20.36 ± 0.15 −20.34 p48 56444.170 4.72 20.32 ± 0.12 −20.39 p48 56444.171 4.72 20.20 ± 0.09 −20.50 p48 56444.270 4.80 20.06 ± 0.15 −20.64 p48 56444.271 4.80 20.08 ± 0.15 −20.62 p48 56445.173 5.51 20.01 ± 0.09 −20.69 p48 56445.174 5.51 19.90 ± 0.10 −20.81 p48 56445.282 5.59 20.48 ± 0.12 −20.23 p48

PTF SLSN-I light curves 113

Table D64. PTF 13cjq photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56506.277 −0.00 20.05 ± 0.12 r p48 56521.427 10.85 20.04 ± 0.10 r p48 56506.314 0.03 20.02 ± 0.12 r p48 56521.463 10.88 20.39 ± 0.12 r p48 56506.435 0.11 20.07 ± 0.11 r p48 56533.196 19.28 20.89 ± 0.24 i p60 56507.336 0.76 20.01 ± 0.12 r p48 56533.198 19.28 20.63 ± 0.17 r p60 56507.421 0.82 20.11 ± 0.11 r p48 56533.201 19.28 20.91 ± 0.16 g p60 56507.458 0.85 20.05 ± 0.11 r p48 56537.297 22.22 20.77 ± 0.14 i p60 56508.359 1.49 20.05 ± 0.11 r p48 56537.299 22.22 21.71 ± 0.22 B p60 56508.437 1.55 20.19 ± 0.10 r p48 56539.238 23.61 20.71 ± 0.11 r p60 56508.476 1.57 20.09 ± 0.10 r p48 56539.240 23.61 22.23 ± 0.33 B p60 56509.377 2.22 20.06 ± 0.10 r p48 56539.242 23.61 21.60 ± 0.15 g p60 56509.434 2.26 20.04 ± 0.10 r p48 56545.388 28.01 21.21 ± 0.21 i p60 56509.473 2.29 20.26 ± 0.11 r p48 56545.391 28.01 21.62 ± 0.20 r p60 56510.375 2.93 20.00 ± 0.10 r p48 56546.226 28.61 21.22 ± 0.28 i p60 56510.428 2.97 20.19 ± 0.10 r p48 56546.232 28.62 22.16 ± 0.26 g p60 56510.467 3.00 20.28 ± 0.22 r p48 56547.216 29.32 20.98 ± 0.17 i p60 56511.370 3.65 20.13 ± 0.10 r p48 56547.251 29.35 22.07 ± 0.23 g p60 56511.433 3.69 20.10 ± 0.10 r p48 56548.176 30.01 21.34 ± 0.30 i p60 56511.471 3.72 20.07 ± 0.10 r p48 56549.150 30.71 21.19 ± 0.28 i p60 56512.374 4.37 20.03 ± 0.11 r p48 56550.144 31.42 21.38 ± 0.28 i p60 56512.429 4.41 20.05 ± 0.10 r p48 56552.186 32.88 21.06 ± 0.36 i p60 56512.467 4.43 20.13 ± 0.10 r p48 56559.149 37.87 21.56 ± 0.26 r p60 56513.369 5.08 20.03 ± 0.10 r p48 56564.132 41.44 22.09 ± 0.33 r p60 56513.428 5.12 20.20 ± 0.11 r p48 56567.130 43.58 21.36 ± 0.23 i p60 56513.466 5.15 20.16 ± 0.11 r p48 56567.132 43.59 22.33 ± 0.36 r p60 56514.367 5.79 20.15 ± 0.10 r p48 56569.253 45.11 21.85 ± 0.29 i p60 56514.426 5.84 20.26 ± 0.11 r p48 56569.256 45.11 21.92 ± 0.21 r p60 56514.462 5.86 20.04 ± 0.10 r p48 56572.170 47.19 21.84 ± 0.30 i p60 56515.366 6.51 20.13 ± 0.11 r p48 56578.134 51.47 21.73 ± 0.31 r p60 56515.423 6.55 20.20 ± 0.11 r p48 56591.393 60.96 22.00 ± 0.32 r p60 56515.460 6.58 20.20 ± 0.11 r p48 56592.252 61.58 22.34 ± 0.32 r p60 56516.362 7.22 20.02 ± 0.10 r p48 56658.136 108.77 22.45 ± 0.35 i p60 56516.416 7.26 20.10 ± 0.10 r p48 56685.141 128.11 22.28 ± 0.32 r p60 56516.454 7.29 20.11 ± 0.10 r p48 56517.355 7.93 20.14 ± 0.10 r p48 56517.410 7.97 19.99 ± 0.10 r p48 56517.447 8.00 20.06 ± 0.10 r p48 56518.348 8.65 20.08 ± 0.11 r p48 56518.402 8.68 20.26 ± 0.11 r p48 56518.439 8.71 20.07 ± 0.11 r p48 56519.341 9.36 20.20 ± 0.11 r p48 56519.412 9.41 20.18 ± 0.10 r p48 56519.449 9.43 20.05 ± 0.11 r p48 56520.351 10.08 20.37 ± 0.12 r p48 56520.428 10.14 20.19 ± 0.11 r p48 56520.465 10.16 20.16 ± 0.10 r p48 56521.368 10.81 20.10 ± 0.12 r p48

114 De Cia et al.

Table D65. PTF 13cjq rest-frame g photometry data.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 56506.277 −0.00 20.50 ± 0.12 −21.16 p48 56521.427 10.85 20.49 ± 0.10 −21.17 p48 56506.314 0.03 20.47 ± 0.12 −21.19 p48 56521.463 10.88 20.84 ± 0.12 −20.82 p48 56506.435 0.11 20.52 ± 0.11 −21.14 p48 56533.198 19.28 21.08 ± 0.17 −20.58 p60 56507.336 0.76 20.46 ± 0.12 −21.20 p48 56539.238 23.61 21.16 ± 0.11 −20.50 p60 56507.421 0.82 20.56 ± 0.11 −21.10 p48 56545.391 28.01 22.07 ± 0.20 −19.59 p60 56507.458 0.85 20.51 ± 0.11 −21.15 p48 56559.149 37.87 22.01 ± 0.26 −19.65 p60 56508.359 1.49 20.50 ± 0.11 −21.16 p48 56564.132 41.44 22.54 ± 0.33 −19.12 p60 56508.437 1.55 20.64 ± 0.10 −21.02 p48 56567.132 43.59 22.78 ± 0.36 −18.88 p60 56508.476 1.57 20.54 ± 0.10 −21.12 p48 56569.256 45.11 22.37 ± 0.21 −19.29 p60 56509.377 2.22 20.51 ± 0.10 −21.15 p48 56578.134 51.47 22.18 ± 0.31 −19.48 p60 56509.434 2.26 20.49 ± 0.10 −21.17 p48 56591.393 60.96 22.45 ± 0.32 −19.21 p60 56509.473 2.29 20.72 ± 0.11 −20.94 p48 56592.252 61.58 22.79 ± 0.32 −18.87 p60 56510.375 2.93 20.45 ± 0.10 −21.21 p48 56685.141 128.11 22.74 ± 0.32 −18.92 p60 56510.428 2.97 20.65 ± 0.10 −21.01 p48 56510.467 3.00 20.73 ± 0.22 −20.93 p48 56511.370 3.65 20.58 ± 0.10 −21.08 p48 56511.433 3.69 20.55 ± 0.10 −21.11 p48 56511.471 3.72 20.52 ± 0.10 −21.14 p48 56512.374 4.37 20.48 ± 0.11 −21.18 p48 56512.429 4.41 20.51 ± 0.10 −21.15 p48 56512.467 4.43 20.58 ± 0.10 −21.08 p48 56513.369 5.08 20.48 ± 0.10 −21.18 p48 56513.428 5.12 20.66 ± 0.11 −21.00 p48 56513.466 5.15 20.62 ± 0.11 −21.04 p48 56514.367 5.79 20.60 ± 0.10 −21.06 p48 56514.426 5.84 20.71 ± 0.11 −20.95 p48 56514.462 5.86 20.50 ± 0.10 −21.16 p48 56515.366 6.51 20.58 ± 0.11 −21.08 p48 56515.423 6.55 20.66 ± 0.11 −21.00 p48 56515.460 6.58 20.66 ± 0.11 −21.00 p48 56516.362 7.22 20.48 ± 0.10 −21.18 p48 56516.416 7.26 20.56 ± 0.10 −21.10 p48 56516.454 7.29 20.57 ± 0.10 −21.09 p48 56517.355 7.93 20.60 ± 0.10 −21.06 p48 56517.410 7.97 20.45 ± 0.10 −21.21 p48 56517.447 8.00 20.51 ± 0.10 −21.15 p48 56518.348 8.65 20.54 ± 0.11 −21.12 p48 56518.402 8.68 20.71 ± 0.11 −20.95 p48 56518.439 8.71 20.52 ± 0.11 −21.14 p48 56519.341 9.36 20.65 ± 0.11 −21.01 p48 56519.412 9.41 20.63 ± 0.10 −21.03 p48 56519.449 9.43 20.50 ± 0.11 −21.16 p48 56520.351 10.08 20.83 ± 0.12 −20.83 p48 56520.428 10.14 20.65 ± 0.11 −21.01 p48 56520.465 10.16 20.61 ± 0.10 −21.05 p48 56521.368 10.81 20.55 ± 0.12 −21.11 p48

PTF SLSN-I light curves 115

Table D66. PTF 13dcc photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56533.359 −55.21 19.68 ± 0.17 r p48 56562.480 −34.86 19.81 ± 0.12 r p48 56533.417 −55.17 19.73 ± 0.11 r p48 56562.514 −34.83 19.72 ± 0.13 r p48 56533.454 −55.14 19.76 ± 0.10 r p48 56563.416 −34.20 19.74 ± 0.14 r p48 56537.335 −52.43 19.81 ± 0.09 r p60 56563.490 −34.15 19.75 ± 0.13 r p48 56537.348 −52.42 19.66 ± 0.11 r p48 56563.523 −34.13 19.91 ± 0.17 r p48 56537.466 −52.34 19.86 ± 0.09 r p48 56564.425 −33.50 19.80 ± 0.12 r p48 56537.502 −52.31 19.70 ± 0.09 r p48 56564.478 −33.46 19.95 ± 0.12 r p48 56538.449 −51.65 19.80 ± 0.09 r p48 56564.511 −33.44 19.87 ± 0.13 r p48 56539.343 −51.03 19.66 ± 0.12 r p48 56565.413 −32.81 19.78 ± 0.12 r p48 56539.380 −51.00 19.79 ± 0.12 r p48 56565.466 −32.77 19.88 ± 0.11 r p48 56539.417 −50.97 19.80 ± 0.11 r p48 56565.500 −32.75 19.86 ± 0.13 r p48 56540.445 −50.26 19.98 ± 0.24 r p48 56566.402 −32.11 19.82 ± 0.11 r p48 56541.337 −49.63 19.73 ± 0.13 r p48 56566.451 −32.08 19.79 ± 0.10 r p48 56541.374 −49.61 19.55 ± 0.22 r p48 56566.484 −32.06 19.85 ± 0.12 r p48 56541.410 −49.58 19.38 ± 0.22 r p48 56567.385 −31.43 19.77 ± 0.10 r p48 56542.337 −48.93 19.77 ± 0.13 r p48 56567.440 −31.39 19.76 ± 0.11 r p48 56542.454 −48.85 19.69 ± 0.11 r p48 56567.473 −31.37 19.86 ± 0.11 r p48 56542.491 −48.83 19.71 ± 0.11 r p48 56568.375 −30.74 19.93 ± 0.11 r p48 56543.393 −48.20 19.84 ± 0.11 r p48 56568.449 −30.68 19.83 ± 0.12 r p48 56543.460 −48.15 19.91 ± 0.11 r p48 56568.484 −30.66 19.83 ± 0.12 r p48 56543.497 −48.12 19.74 ± 0.10 r p48 56569.386 −30.03 19.77 ± 0.13 r p48 56545.326 −46.84 19.55 ± 0.12 r p48 56569.456 −29.98 19.84 ± 0.11 r p48 56546.323 −46.15 19.76 ± 0.13 r p48 56569.491 −29.96 19.76 ± 0.12 r p48 56546.429 −46.07 19.86 ± 0.10 r p48 56570.393 −29.33 19.83 ± 0.27 r p48 56546.465 −46.05 19.86 ± 0.10 r p48 56570.468 −29.27 19.39 ± 0.21 r p48 56547.367 −45.42 19.79 ± 0.12 r p48 56570.503 −29.25 19.94 ± 0.27 r p48 56547.493 −45.33 19.80 ± 0.11 r p48 56571.405 −28.62 20.01 ± 0.18 r p48 56548.321 −44.75 19.82 ± 0.12 r p48 56571.458 −28.58 19.72 ± 0.13 r p48 56548.470 −44.65 19.76 ± 0.09 r p48 56571.492 −28.56 20.08 ± 0.23 r p48 56548.507 −44.62 19.71 ± 0.11 r p48 56572.395 −27.93 19.83 ± 0.13 r p48 56549.408 −43.99 19.88 ± 0.09 r p48 56572.458 −27.88 19.85 ± 0.12 r p48 56549.454 −43.96 19.82 ± 0.09 r p48 56573.400 −27.22 19.83 ± 0.12 r p48 56549.491 −43.93 19.76 ± 0.08 r p48 56573.437 −27.20 19.98 ± 0.12 r p48 56550.393 −43.30 19.77 ± 0.12 r p48 56573.470 −27.17 19.99 ± 0.16 r p48 56550.479 −43.24 19.83 ± 0.09 r p48 56576.389 −25.13 19.83 ± 0.11 r p48 56550.513 −43.22 19.81 ± 0.08 r p48 56576.494 −25.06 19.90 ± 0.13 r p48 56551.415 −42.59 19.78 ± 0.13 r p48 56576.527 −25.04 19.78 ± 0.15 r p48 56551.460 −42.56 19.86 ± 0.12 r p48 56588.209 −16.87 19.76 ± 0.18 r p48 56551.494 −42.53 19.83 ± 0.09 r p48 56588.353 −16.77 20.05 ± 0.21 r p48 56552.396 −41.90 19.76 ± 0.14 r p48 56588.379 −16.75 19.76 ± 0.17 r p48 56552.441 −41.87 19.88 ± 0.13 r p48 56589.281 −16.12 19.62 ± 0.12 r p48 56552.474 −41.85 19.80 ± 0.14 r p48 56589.306 −16.11 19.93 ± 0.15 r p48 56561.283 −35.69 19.81 ± 0.21 r p48 56589.334 −16.09 19.76 ± 0.11 r p48 56561.364 −35.64 19.87 ± 0.15 r p48 56590.356 −15.37 19.74 ± 0.12 r p48 56561.397 −35.61 19.85 ± 0.14 r p48 56590.382 −15.35 19.72 ± 0.13 r p48 56562.448 −34.88 19.90 ± 0.13 r p48 56591.283 −14.73 19.75 ± 0.13 r p48

116 De Cia et al.

Table D67. Continuation of Table D66.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56591.324 −14.70 19.64 ± 0.09 r p48 56645.123 22.90 20.13 ± 0.19 g p60 56591.349 −14.68 19.68 ± 0.09 r p48 56647.133 24.31 19.75 ± 0.21 i p60 56592.296 −14.02 19.61 ± 0.09 r p48 56647.134 24.31 20.83 ± 0.29 r p60 56592.389 −13.95 19.67 ± 0.11 r p48 56647.138 24.31 20.46 ± 0.16 g p60 56592.415 −13.93 19.71 ± 0.09 r p48 56648.114 24.99 20.15 ± 0.15 i p60 56596.187 −11.30 19.75 ± 0.16 r p48 56648.116 25.00 20.02 ± 0.09 r p60 56596.300 −11.22 19.66 ± 0.13 r p48 56648.120 25.00 20.43 ± 0.10 g p60 56596.326 −11.20 19.67 ± 0.12 r p48 56655.200 29.95 19.99 ± 0.17 i p60 56597.228 −10.57 19.54 ± 0.14 r p48 56655.202 29.95 20.25 ± 0.16 r p60 56597.312 −10.51 19.70 ± 0.13 r p48 56655.207 29.95 20.85 ± 0.20 g p60 56597.337 −10.49 19.55 ± 0.12 r p48 56656.169 30.62 20.17 ± 0.15 i p60 56598.240 −9.86 19.59 ± 0.15 r p48 56656.171 30.63 20.25 ± 0.13 r p60 56598.308 −9.82 19.62 ± 0.11 r p48 56656.176 30.63 20.66 ± 0.14 g p60 56598.334 −9.80 19.67 ± 0.12 r p48 56657.131 31.30 20.14 ± 0.10 i p60 56599.236 −9.17 19.58 ± 0.12 r p48 56657.133 31.30 20.21 ± 0.08 r p60 56599.277 −9.14 19.71 ± 0.11 r p48 56657.138 31.30 20.62 ± 0.09 g p60 56599.302 −9.12 19.61 ± 0.11 r p48 56658.126 31.99 20.15 ± 0.10 i p60 56600.245 −8.46 19.59 ± 0.10 r p48 56658.129 31.99 20.25 ± 0.09 r p60 56600.363 −8.38 19.54 ± 0.12 r p48 56658.133 32.00 20.66 ± 0.10 g p60 56600.388 −8.36 19.47 ± 0.21 r p48 56659.202 32.74 20.21 ± 0.11 i p60 56602.171 −7.12 19.55 ± 0.17 r p48 56660.154 33.41 20.12 ± 0.11 i p60 56602.228 −7.08 19.57 ± 0.20 r p48 56660.156 33.41 20.29 ± 0.10 r p60 56602.255 −7.06 19.54 ± 0.16 r p48 56660.161 33.41 20.65 ± 0.10 g p60 56603.168 −6.42 19.37 ± 0.14 r p48 56662.209 34.85 20.38 ± 0.18 i p60 56603.236 −6.37 19.44 ± 0.12 r p48 56662.211 34.85 20.30 ± 0.13 r p60 56603.295 −6.33 19.51 ± 0.11 r p48 56662.216 34.85 20.82 ± 0.13 g p60 56604.295 −5.63 19.60 ± 0.09 r p48 56670.136 40.39 19.07 ± 0.34 i p60 56604.412 −5.55 19.57 ± 0.09 r p48 56671.191 41.12 20.41 ± 0.20 i p60 56604.438 −5.53 19.58 ± 0.11 r p48 56671.194 41.13 20.60 ± 0.19 r p60 56605.339 −4.90 19.53 ± 0.11 r p48 56672.195 41.83 20.88 ± 0.31 i p60 56605.381 −4.87 19.62 ± 0.11 r p48 56672.197 41.83 20.59 ± 0.26 r p60 56605.407 −4.85 19.54 ± 0.10 r p48 56673.185 42.52 20.60 ± 0.24 r p60 56607.157 −3.63 19.82 ± 0.16 r p48 56676.130 44.58 20.70 ± 0.13 i p60 56607.295 −3.53 19.54 ± 0.12 r p48 56676.132 44.58 21.33 ± 0.15 r p60 56607.323 −3.51 19.47 ± 0.12 r p48 56676.137 44.58 21.59 ± 0.14 g p60 56608.225 −2.88 19.34 ± 0.11 r p48 56683.250 49.55 21.13 ± 0.21 i p60 56608.262 −2.86 19.60 ± 0.17 r p48 56683.252 49.55 21.37 ± 0.24 r p60 56608.292 −2.84 19.48 ± 0.15 r p48 56685.127 50.86 21.41 ± 0.19 i p60 56609.193 −2.21 19.64 ± 0.15 r p48 56685.134 50.87 21.65 ± 0.25 r p60 56609.341 −2.10 19.45 ± 0.12 r p48 56697.144 59.26 21.43 ± 0.26 i p60 56637.117 17.31 19.95 ± 0.18 i p60 56697.146 59.26 21.51 ± 0.24 r p60 56637.119 17.31 19.88 ± 0.18 r p60 56701.150 62.06 22.29 ± 0.39 r DCT 56637.123 17.31 20.14 ± 0.16 g p60 56701.160 62.07 21.80 ± 0.32 i DCT 56641.787 20.57 22.52 ± 0.41 UVW1 Swift/UVOT 56710.176 68.37 21.25 ± 0.26 i p60 56643.118 21.50 22.48 ± 0.52 UVW1 Swift/UVOT 56908.400 206.91 23.45 ± 0.55 r DCT 56645.119 22.90 19.93 ± 0.23 r p60 57070.000 319.85 24.90 ± 0.10 r HST

PTF SLSN-I light curves 117

Table D68. PTF 13dcc rest-frame g photometry data.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 56533.359 −55.21 20.18 ± 0.17 −21.70 p48 56562.480 −34.86 20.31 ± 0.12 −21.57 p48 56533.417 −55.17 20.23 ± 0.11 −21.65 p48 56562.514 −34.83 20.21 ± 0.13 −21.66 p48 56533.454 −55.14 20.26 ± 0.10 −21.62 p48 56563.416 −34.20 20.23 ± 0.14 −21.64 p48 56537.335 −52.43 20.30 ± 0.09 −21.57 p60 56563.490 −34.15 20.25 ± 0.13 −21.63 p48 56537.348 −52.42 20.16 ± 0.11 −21.72 p48 56563.523 −34.13 20.41 ± 0.17 −21.46 p48 56537.466 −52.34 20.36 ± 0.09 −21.52 p48 56564.425 −33.50 20.30 ± 0.12 −21.58 p48 56537.502 −52.31 20.19 ± 0.09 −21.68 p48 56564.478 −33.46 20.45 ± 0.12 −21.43 p48 56538.449 −51.65 20.30 ± 0.09 −21.58 p48 56564.511 −33.44 20.37 ± 0.13 −21.50 p48 56539.343 −51.03 20.16 ± 0.12 −21.72 p48 56565.413 −32.81 20.28 ± 0.12 −21.60 p48 56539.380 −51.00 20.29 ± 0.12 −21.59 p48 56565.466 −32.77 20.38 ± 0.11 −21.49 p48 56539.417 −50.97 20.30 ± 0.11 −21.58 p48 56565.500 −32.75 20.35 ± 0.13 −21.52 p48 56540.445 −50.26 20.48 ± 0.24 −21.40 p48 56566.402 −32.11 20.31 ± 0.11 −21.56 p48 56541.337 −49.63 20.23 ± 0.13 −21.65 p48 56566.451 −32.08 20.29 ± 0.10 −21.58 p48 56541.374 −49.61 20.05 ± 0.22 −21.83 p48 56566.484 −32.06 20.34 ± 0.12 −21.53 p48 56541.410 −49.58 19.88 ± 0.22 −22.00 p48 56567.385 −31.43 20.27 ± 0.10 −21.61 p48 56542.337 −48.93 20.27 ± 0.13 −21.60 p48 56567.440 −31.39 20.26 ± 0.11 −21.62 p48 56542.454 −48.85 20.19 ± 0.11 −21.69 p48 56567.473 −31.37 20.36 ± 0.11 −21.52 p48 56542.491 −48.83 20.21 ± 0.11 −21.67 p48 56568.375 −30.74 20.42 ± 0.11 −21.45 p48 56543.393 −48.20 20.33 ± 0.11 −21.54 p48 56568.449 −30.68 20.33 ± 0.12 −21.55 p48 56543.460 −48.15 20.40 ± 0.11 −21.47 p48 56568.484 −30.66 20.33 ± 0.12 −21.55 p48 56543.497 −48.12 20.23 ± 0.10 −21.64 p48 56569.386 −30.03 20.27 ± 0.13 −21.61 p48 56545.326 −46.84 20.05 ± 0.12 −21.83 p48 56569.456 −29.98 20.34 ± 0.11 −21.53 p48 56546.323 −46.15 20.26 ± 0.13 −21.62 p48 56569.491 −29.96 20.25 ± 0.12 −21.62 p48 56546.429 −46.07 20.36 ± 0.10 −21.52 p48 56570.393 −29.33 20.32 ± 0.27 −21.55 p48 56546.465 −46.05 20.36 ± 0.10 −21.52 p48 56570.468 −29.27 19.89 ± 0.21 −21.99 p48 56547.367 −45.42 20.29 ± 0.12 −21.59 p48 56570.503 −29.25 20.44 ± 0.27 −21.43 p48 56547.493 −45.33 20.29 ± 0.11 −21.58 p48 56571.405 −28.62 20.50 ± 0.18 −21.37 p48 56548.321 −44.75 20.32 ± 0.12 −21.56 p48 56571.458 −28.58 20.22 ± 0.13 −21.66 p48 56548.470 −44.65 20.26 ± 0.09 −21.61 p48 56571.492 −28.56 20.57 ± 0.23 −21.30 p48 56548.507 −44.62 20.20 ± 0.11 −21.67 p48 56572.395 −27.93 20.33 ± 0.13 −21.55 p48 56549.408 −43.99 20.37 ± 0.09 −21.50 p48 56572.458 −27.88 20.35 ± 0.12 −21.52 p48 56549.454 −43.96 20.31 ± 0.09 −21.56 p48 56573.400 −27.22 20.32 ± 0.12 −21.55 p48 56549.491 −43.93 20.26 ± 0.08 −21.62 p48 56573.437 −27.20 20.48 ± 0.12 −21.40 p48 56550.393 −43.30 20.26 ± 0.12 −21.61 p48 56573.470 −27.17 20.49 ± 0.16 −21.38 p48 56550.479 −43.24 20.33 ± 0.09 −21.55 p48 56576.389 −25.13 20.32 ± 0.11 −21.55 p48 56550.513 −43.22 20.30 ± 0.08 −21.57 p48 56576.494 −25.06 20.40 ± 0.13 −21.48 p48 56551.415 −42.59 20.27 ± 0.13 −21.60 p48 56576.527 −25.04 20.27 ± 0.15 −21.60 p48 56551.460 −42.56 20.36 ± 0.12 −21.51 p48 56588.209 −16.87 20.25 ± 0.18 −21.63 p48 56551.494 −42.53 20.32 ± 0.09 −21.55 p48 56588.353 −16.77 20.54 ± 0.21 −21.34 p48 56552.396 −41.90 20.26 ± 0.14 −21.62 p48 56588.379 −16.75 20.25 ± 0.17 −21.63 p48 56552.441 −41.87 20.38 ± 0.13 −21.50 p48 56589.281 −16.12 20.11 ± 0.12 −21.77 p48 56552.474 −41.85 20.30 ± 0.14 −21.58 p48 56589.306 −16.11 20.42 ± 0.15 −21.45 p48 56561.283 −35.69 20.31 ± 0.21 −21.57 p48 56589.334 −16.09 20.25 ± 0.11 −21.62 p48 56561.364 −35.64 20.37 ± 0.15 −21.50 p48 56590.356 −15.37 20.23 ± 0.12 −21.65 p48 56561.397 −35.61 20.35 ± 0.14 −21.52 p48 56590.382 −15.35 20.21 ± 0.13 −21.67 p48 56562.448 −34.88 20.40 ± 0.13 −21.48 p48 56591.283 −14.73 20.24 ± 0.13 −21.63 p48

118 De Cia et al.

Table D69. Continuation of Table D68.

MJD Phase mg Mg Tel Ref MJD Phase mg Mg Tel Ref 56591.324 −14.70 20.13 ± 0.09 −21.74 p48 56657.133 31.30 20.67 ± 0.08 −21.20 p60 56591.349 −14.68 20.17 ± 0.09 −21.71 p48 56658.129 31.99 20.71 ± 0.09 −21.16 p60 56592.296 −14.02 20.09 ± 0.09 −21.78 p48 56660.156 33.41 20.75 ± 0.10 −21.12 p60 56592.389 −13.95 20.16 ± 0.11 −21.72 p48 56662.211 34.85 20.77 ± 0.13 −21.11 p60 56592.415 −13.93 20.19 ± 0.09 −21.68 p48 56671.194 41.13 21.06 ± 0.19 −20.82 p60 56596.187 −11.30 20.23 ± 0.16 −21.64 p48 56672.197 41.83 21.05 ± 0.26 −20.82 p60 56596.300 −11.22 20.14 ± 0.13 −21.73 p48 56673.185 42.52 21.06 ± 0.24 −20.82 p60 56596.326 −11.20 20.15 ± 0.12 −21.72 p48 56676.132 44.58 21.79 ± 0.15 −20.09 p60 56597.228 −10.57 20.02 ± 0.14 −21.85 p48 56683.252 49.55 21.83 ± 0.24 −20.05 p60 56597.312 −10.51 20.19 ± 0.13 −21.69 p48 56685.134 50.87 22.11 ± 0.25 −19.76 p60 56597.337 −10.49 20.04 ± 0.12 −21.84 p48 56697.146 59.26 21.97 ± 0.24 −19.91 p60 56598.240 −9.86 20.07 ± 0.15 −21.81 p48 56701.150 62.06 22.75 ± 0.39 −19.13 DCT 56598.308 −9.82 20.10 ± 0.11 −21.77 p48 56908.400 206.91 23.91 ± 0.55 −17.96 DCT 56598.334 −9.80 20.16 ± 0.12 −21.72 p48 57070.000 319.85 25.37 ± 0.10 −16.51 HST 56599.236 −9.17 20.06 ± 0.12 −21.82 p48 56599.277 −9.14 20.19 ± 0.11 −21.69 p48 56599.302 −9.12 20.09 ± 0.11 −21.78 p48 56600.245 −8.46 20.07 ± 0.10 −21.81 p48 56600.363 −8.38 20.02 ± 0.12 −21.86 p48 56600.388 −8.36 19.95 ± 0.21 −21.93 p48 56602.171 −7.12 20.03 ± 0.17 −21.84 p48 56602.228 −7.08 20.06 ± 0.20 −21.82 p48 56602.255 −7.06 20.02 ± 0.16 −21.86 p48 56603.168 −6.42 19.85 ± 0.14 −22.02 p48 56603.236 −6.37 19.92 ± 0.12 −21.95 p48 56603.295 −6.33 19.99 ± 0.11 −21.89 p48 56604.295 −5.63 20.08 ± 0.09 −21.79 p48 56604.412 −5.55 20.05 ± 0.09 −21.82 p48 56604.438 −5.53 20.06 ± 0.11 −21.81 p48 56605.339 −4.90 20.02 ± 0.11 −21.86 p48 56605.381 −4.87 20.10 ± 0.11 −21.77 p48 56605.407 −4.85 20.02 ± 0.10 −21.85 p48 56607.157 −3.63 20.30 ± 0.16 −21.57 p48 56607.295 −3.53 20.02 ± 0.12 −21.85 p48 56607.323 −3.51 19.95 ± 0.12 −21.93 p48 56608.225 −2.88 19.82 ± 0.11 −22.05 p48 56608.262 −2.86 20.08 ± 0.17 −21.80 p48 56608.292 −2.84 19.96 ± 0.15 −21.92 p48 56609.193 −2.21 20.12 ± 0.15 −21.76 p48 56609.341 −2.10 19.93 ± 0.12 −21.94 p48 56637.119 17.31 20.35 ± 0.18 −21.52 p60 56645.119 22.90 20.39 ± 0.23 −21.48 p60 56647.134 24.31 21.30 ± 0.29 −20.58 p60 56648.116 25.00 20.48 ± 0.09 −21.39 p60 56655.202 29.95 20.71 ± 0.16 −21.16 p60 56656.171 30.63 20.71 ± 0.13 −21.16 p60

PTF SLSN-I light curves 119

Table D70. PTF 13ehe photometry data.

MJD Phase m Filter Tel MJD Phase m Filter Tel 56621.333 −35.88 20.23 ± 0.19 r p48 56702.250 24.35 19.80 ± 0.01 r DCT 56626.540 −32.01 20.01 ± 0.13 r p48 56702.500 24.54 19.75 ± 0.04 r DCT 56639.194 −22.59 19.94 ± 0.19 r p48 56702.500 24.54 20.25 ± 0.04 g DCT 56639.249 −22.55 20.04 ± 0.25 r p48 56702.500 24.54 19.65 ± 0.04 i DCT 56640.177 −21.86 19.98 ± 0.24 r p48 56703.151 25.02 19.76 ± 0.09 i p60 56640.217 −21.83 19.86 ± 0.25 r p48 56703.153 25.02 19.68 ± 0.09 r p60 56640.302 −21.76 19.89 ± 0.26 r p48 56703.157 25.02 20.34 ± 0.12 g p60 56640.360 −21.72 19.92 ± 0.26 r p48 56710.154 30.23 19.77 ± 0.09 i p60 56640.404 −21.69 19.69 ± 0.23 r p48 56710.156 30.23 19.76 ± 0.08 r p60 56640.447 −21.66 19.54 ± 0.24 r p48 56710.160 30.24 20.38 ± 0.09 g p60 56640.490 −21.62 19.64 ± 0.21 r p48 56910.490 179.36 22.09 ± 0.07 r DCT 56640.531 −21.59 20.43 ± 0.33 r p48 56910.500 179.37 22.05 ± 0.08 r DCT 56647.487 −16.42 19.45 ± 0.16 r p48 57070.000 298.10 23.98 ± 0.06 r HST 56647.518 −16.39 19.60 ± 0.17 r p48 56647.551 −16.37 19.51 ± 0.17 r p48 56647.575 −16.35 19.64 ± 0.27 r p48 56648.357 −15.77 19.74 ± 0.10 r p60 56648.358 −15.77 19.83 ± 0.11 r p60 56662.178 −5.48 19.99 ± 0.20 i p60 56662.180 −5.48 19.62 ± 0.11 r p60 56662.184 −5.47 19.94 ± 0.10 g p60 56663.135 −4.77 19.73 ± 0.10 i p60 56667.465 −1.54 19.79 ± 0.15 r p60 56667.466 −1.54 19.96 ± 0.13 g p60 56671.174 1.22 19.68 ± 0.13 i p60 56672.168 1.96 19.81 ± 0.18 i p60 56673.090 2.64 19.78 ± 0.17 i p60 56673.094 2.65 20.04 ± 0.24 g p60 56675.188 4.20 19.58 ± 0.17 r p48 56675.236 4.24 19.48 ± 0.23 r p48 56675.299 4.29 19.24 ± 0.25 r p48 56675.342 4.32 19.34 ± 0.20 r p48 56675.395 4.36 19.41 ± 0.36 r p48 56675.436 4.39 19.75 ± 0.25 r p48 56675.478 4.42 19.69 ± 0.23 r p48 56675.523 4.45 19.49 ± 0.21 r p48 56680.095 7.86 19.70 ± 0.11 i p60 56680.096 7.86 19.66 ± 0.09 r p60 56680.101 7.86 19.99 ± 0.09 g p60 56685.098 11.58 19.62 ± 0.11 i p60 56685.100 11.58 19.69 ± 0.10 r p60 56685.104 11.59 20.03 ± 0.09 g p60 56697.114 20.53 19.69 ± 0.09 i p60 56697.115 20.53 19.70 ± 0.10 r p60 56697.120 20.53 20.23 ± 0.12 g p60 56702.250 24.35 20.79 ± 0.03 g DCT

120 De Cia et al.

Table D71. PTF 13ehe rest-frame g photometry data.

MJD Phase mg Mg Telescope Reference 56621.333 −35.88 20.62 ± 0.19 −20.67 p48 56626.540 −32.01 20.40 ± 0.13 −20.90 p48 56639.194 −22.59 20.33 ± 0.19 −20.97 p48 56639.249 −22.55 20.43 ± 0.25 −20.86 p48 56640.177 −21.86 20.37 ± 0.24 −20.93 p48 56640.217 −21.83 20.25 ± 0.25 −21.04 p48 56640.302 −21.76 20.28 ± 0.26 −21.01 p48 56640.360 −21.72 20.31 ± 0.26 −20.98 p48 56640.404 −21.69 20.08 ± 0.23 −21.22 p48 56640.447 −21.66 19.93 ± 0.24 −21.37 p48 56640.490 −21.62 20.03 ± 0.21 −21.26 p48 56640.531 −21.59 20.82 ± 0.33 −20.47 p48 56647.487 −16.42 19.85 ± 0.16 −21.45 p48 56647.518 −16.39 20.00 ± 0.17 −21.29 p48 56647.551 −16.37 19.91 ± 0.17 −21.38 p48 56647.575 −16.35 20.04 ± 0.27 −21.26 p48 56648.357 −15.77 20.13 ± 0.10 −21.16 p60 56648.358 −15.77 20.23 ± 0.11 −21.06 p60 56662.180 −5.48 20.03 ± 0.11 −21.26 p60 56667.465 −1.54 20.20 ± 0.15 −21.09 p60 56675.188 4.20 20.00 ± 0.17 −21.29 p48 56675.236 4.24 19.90 ± 0.23 −21.39 p48 56675.299 4.29 19.66 ± 0.25 −21.64 p48 56675.342 4.32 19.76 ± 0.20 −21.53 p48 56675.395 4.36 19.83 ± 0.36 −21.46 p48 56675.436 4.39 20.17 ± 0.25 −21.12 p48 56675.478 4.42 20.11 ± 0.23 −21.19 p48 56675.523 4.45 19.92 ± 0.21 −21.38 p48 56680.096 7.86 20.09 ± 0.09 −21.21 p60 56685.100 11.58 20.12 ± 0.10 −21.17 p60 56697.115 20.53 20.14 ± 0.10 −21.16 p60 56702.250 24.35 20.24 ± 0.01 −21.05 DCT 56702.500 24.54 20.19 ± 0.04 −21.10 DCT 56703.153 25.02 20.12 ± 0.09 −21.18 p60 56710.156 30.23 20.21 ± 0.08 −21.09 p60 56910.490 179.36 22.58 ± 0.07 −18.72 DCT 56910.500 179.37 22.54 ± 0.08 −18.76 DCT 57070.000 298.10 24.44 ± 0.06 −16.86 HST