arXiv:1807.11045v1 [cond-mat.quant-gas] 29 Jul 2018

Thermalization and localization of an oscillating Bose-Einstein condensate in a disordered trap

Che-Hsiu Hsueh,^1 Russell Ong,^1 Jing-Fu Tseng,^1 Makoto Tsubota,^{2, 3, ∗} and Wen-Chin Wu^{1, †} 1Department of Physics, National Taiwan Normal University, Taipei 11677, Taiwan 2Department of Physics, Osaka City University, Sugimoto 3-3-138, Sumiyoshi-ku, Osaka 558-8585, Japan 3The OCU Advanced Research Institute for Natural Science and Technology (OCARINA), Osaka, Japan (Dated: July 31, 2018)

We numerically simulate an oscillating Bose-Einstein condensate in a disordered trap [Phys. Rev. A 82, 033603 (2010)] and the results are in good agreement with the experiment. It allows us to verify that total energy and particle number are conserved in this quantum system. The disorder acts as a medium, which results in a relaxation from nonequilibrium to equilibrium, i.e., thermalization. An algebraic localization is realized when the system approaches the equilibrium, and if the system falls into the regime when the healing length of the condensate exceeds the correlation length of the disorder, exponential Anderson localization is to be observed.

Anderson localization (AL) had been a long-studied phenomenon in electronic systems [1] . When transporting in an environment with random disorder, waves of electrons get localized after multiple scattering with the disorder. Recently there is a resurgence of studies of AL in a variety of systems such as the photonic crystals [2, 3], the ultrasound in 3D elastic networks [4], the quantum chaotic systems [5], and the cold atoms [6, 7]. The experiment [6] of cold atoms was done by expanding Bose condensate in a weak random potential in which the healing length (ξ) of the condensate exceeds the correlation length (σ_D) of the disorder, ξ > σ_D. In this regime, the particle interaction is relatively unimportant to which ξ → ∞ corresponds to a noninteracting limit. The experiment [6] confirmed that the localized condensate exhibits an exponential density profile in a one-dimensional geometry, in agreement with the theory of Sanchez-Palencia et al. [8].

In this Letter, we show that an oscillating condensate in a disordered trap, such as the experiment done by Dries et al. [9], can also exhibit AL when it comes to equilibrium and if it falls into the regime ξ > σ_D. Using exactly the same parameters of the experiment reported in Fig. 2 of Ref. [9] for ξ < σ_D, we perform a numerical simulation based on the Gross-Pitaveskii (GP) approach in the presence of a spatially random disorder potential. The results are in good agreement with the experiment as far as the overall spatial dynamics is concerned. It allows us to verify that when time passes a relaxation time t_c (discussed later), the system enters an algebraical localized state [8]. This motivates to carry out another simulation with the same parameters except by reducing σ_D to make ξ > σ_D. In this case, exponential AL is eventually observed.

Another important factor in such a system is that it provides a simple framework to investigate the long-standing question on how an “isolated” many-body quantum system, without coupling to the reservoir, can relax to a steady state that seems to be in thermodynamic equilibrium, i.e., thermalization [10–12]. Our results show that total energy and particle number of the system are conserved and temporal entropy reveals that a relaxation process from nonequilibrium to equilibrium does exhibit. Random disorder plays the role of a medium (or transistor) which results in the exchange of partial kinetic energy with partial potential energy. When t ≫ t_c, the system reaches a thermodynamic equilibrium in which both kinetic and potential energies come to a constant. There is no dissipation of the total energy through any kind of friction. It becomes evident that the thermalization to equilibrium is accompanied by the localization in the system.

To make a direct comparison with the experiment reported in Fig. 2 of Ref. [9], we consider a 1D Bose gas with a repulsive contact interaction that is trapped in a harmonic potential V_{ho}(z) = mω^2z^2/2. In the dilute and ultracold condition, the condensate wave function ψ (z, t) is governed by the GP equation in the presence of a real spatially random disordered potential V_{dis}(z), iℏ∂_tψ = [ − ℏ^2 2m ∂^2_z + V_{ho}(z) + V_{dis}(z) + Ng |ψ|^2 − μ ] ψ. (1) Here N is the total number of atoms, g is the coupling constant of contact interaction, μ is the chemical potential, and ψ is normalized to one, ∫ |ψ|^2dz = 1. The healing length at the center of the condensate is defined as ξ = ℏ/ √ 2mμ. The disorder correlation length, σ_D, is defined by fitting the autocorrelation function ⟨V_{dis}(z)V_{dis}(z + Δz)⟩ = V^2_D exp(−2Δz^2/σ^2_D) with V_D the strength of V_{dis}(z) [13].

In the experiment, the condensate is released at a position off the center of the harmonic trap that results in the subsequent oscillations. For numerical convenience, we take an alternative scheme such that the condensate is released at the trap center but with an initial velocity. To obtain an initial wave function with a velocity v_0, we apply the Galilean transformation: ψ = φ exp(imv_0z) and in the absence of disorder, the corresponding GP equation for the residual wave function φ is iℏ∂_tφ = [ 1 2m ( ℏ i ∂_z − mv_0 )_2 + V_{ho} (z) + Ng |φ|^2 − μ ] φ. (2)

FIG. 1. (a) Spatial and temporal distribution of an oscillating condensate. The calculated norm of the spatial condensate wave function are potted in z-direction at various times. Black dots are the experimentally measured temporal center-of-mass coordinates, taken from Fig. 2 of Ref. [9]. (b) & (c) Close examinations of the results for t < tc ≈ 4s (nonequilibrium) and for t > tc (approaching the equilibrium in accompany of localization).

Long-term imaginary-time evolution of Eq. (2) gives φ which in turn gives the initial wave function ψ. A cutoff wavevector k_c corresponding to the shortest length scale or the largest k scale in association with the healing length ξ is naturally introduced in the simulation which gives the best results. In natural units: ℏ = m = ω = 1, experimental parameters are μ = 200, v_0 = 37.5, V_D = 50.9, and σ_D = 0.25 that correspond to the regime ξ < σ_D [9].

Fig. 1(a) shows the spatial and temporal results of the oscillating condensate simulation. We plot, at various times, the calculated norm of the spatial condensate wave function in z-direction. For comparison, black dots correspond to experimentally measured temporal center-of-mass coordinates (reported in Fig. 2 of Ref. [9]). Surprisingly it gives a very good agreement between the simulation and the experiment. Close examinations of the results are shown in Fig. 1(b) for t < t_c ≈ 4s when the system is still out of equilibrium and in Fig. 1(c) for t > t_c when the system is approaching the equilibrium. In view of Fig. 1(b), the calculated temporal density maxima match well with the experimental data points. One also sees that a minor (long-tail) part of atoms oscillate out-of-phase to the major (central) part of atoms, which is consistent with the experimental observation (see, for example, Fig. 5 in Ref. [9]). In the experiment [9], the system was considered to be separated into a thermal (non-condensed) component and a condensed component. At this earlier stage (t < t_c), no major localization is yet to occur and our major (central) part corresponds to their condensed component, while our minor (long-tail) part corresponds to their thermal component.

Fig. 1(c) shows the regime when the system is approaching the equilibrium and the vast localization has occurred. In this regime, the system is seen to consist of both localized and extended parts – localized part mainly exists in the long-tail area and extended part mainly exists in the central area [14]. One sees that the oscillations of the central extended parts are significantly reduced compared to those at t < t_c. It signals that the system is approaching the equilibrium. In contrast, the long-tail part is seen to be completely static as the clear evidence of localization. In the two-component scenario of Ref. [9]), it says that the thermal (incoherent) component gets localized, while the condensed (coherent) component remains extended.

The good agreement between the simulation and the experiment allows us to study in more details the two important phenomena, thermalization and localization. Total energy of the system consists of four terms: E_{tot}(t) = E_{kin}(t) + E_{pot}(t) + E_{dis}(t) + E_{int}(t), where the kinetic energy E_{kin}(t) = ∫ |ℏ∂_zψ|^2 / (2m) dz, the potential energy E_{pot}(t) = ∫ V_{ho} |ψ|^2 dz, the disorder energy E_{dis}(t) = ∫ V_{dis} |ψ|^2 dz, and the interaction energy E_{int}(t) = (Ng/2) ∫ |ψ|^4 dz. Fig. 2 shows the time evolution of the four energies, respectively. As random disorder

FIG. 2. Time evolution of the four energies in association with the dynamics shown in Fig. 1. Total energy is conserved for the entire process.

potential is rapidly varying in space, E_{dis} ≃ 0 (purple line) for the entire process. Moreover, because both the trapping and disorder potentials are real and time-independent, one expects that there is no energy loss. Conservation of total energy is indeed shown in Fig. 2 (black line). Of most interest, during the process partial kinetic energy is in exchange with partial potential energy and when t ≫ t_c, both energies are expected to come to a constant. It seems that the dissipation discussed in Refs. [9, 15, 16] can be realized as the result of the exchange between kinetic and potential energies.

In the current weakly interacting system, E_{int} is relatively small compared to both E_{kin} and E_{pot}. Thus the energy exchange occurs mainly between E_{kin} and E_{pot}. Moreover, as clearly seen in Fig. 2, the energy exchange rate or the transportation of the condensate is significantly reduced when t > t_c. One can also verify whether the virial theorem is satisfied when the system approaches the equilibrium. For the current system described by the GP equation (1), the following condition 2E_{kin} − 2E_{pot} + dE_{int} = 0 (3) with d the dimension should be satisfied at equilibrium [17]. From Fig. 2, the condition E_{pot} ≃ E_{kin} + E_{int}/2 is indeed satisfied with d = 1.

Owing to the randomness nature of the wave function, it is particularly useful to study the corresponding waveaction spectrum n_k(t) in the context of wave turbulence [18]. When expressing the condensate wave function ψ (z, t) in terms of Madelung transformation, ψ (z, t) = √ ρ (z, t) exp [iφ (z, t)] with ρ and φ the density and phase, the hydrodynamic kinetic-energy density is K = (m/2) | (√ ρu ) |^2 with u ≡ (ℏ/m) ∂_z φ the velocity. To study the scaling laws, one applies the sum rule: K(t) = ∫_{kc} 0 ~K (k, t) dk, where ~K (k, t) is the kineticenergy spectrum and k_c is the cutoff wavevector mentioned

FIG. 3. Temporal entropy of the oscillating condensate calculated from the simulation in Fig. 1. The inset shows the Rayleigh- Jeans spectrum for the waveaction at t = 7.3s when the system approaches the equilibrium. tc ≈ 4s is the relaxation time.

earlier. The corresponding waveaction spectrum is then given by n_k (t) = k^{−2} ~K (k, t) and one can define the entropy S(t) in association with n_k [19–22], S(t) = ∫ dk ln [n_k(t)] . (4)

Results of S(t) are shown in Fig. 3. Major features are that ΔS(t) ≡ lim_{Δt→0}[S(t + Δt) − S(t)] > 0 when t < t_c and ΔS(t) → 0 when t > t_c. It unambiguously identifies that thermalization is developed in the system. In earlier process, one also sees the Fermi-Pasta-Ulam- Tsingou (FPUT) recurrence effect that is consistent with the oscillation of the system. In the inset of Fig. 3, we show n_k at t = 7.3s ≫ t_c. It follows the Rayleigh-Jeans spectrum, n_k ∼ k^{−2}, which indicates that the energy spectrum ~K is a constant, or equipartition in k space. In other words, the system corresponds to a non-dissipative one with a detailed balance.

Here we discuss the relaxation time t_c. As studied by Bhongale et al. [15], by comparing the condensate centerof-mass speed v to the sound speed c ≡ √ μ/m, the entire oscillation process can be divided into fast or supersonic (v > c) and slow or subsonic (v < c) regions. When v ≤ c, the relatively slow motion of the (central) extended part does not affect much the distribution of the (long-tail) localized part. As a matter of fact, the relaxation time t_c can be well defined as the time when the center-of-mass speed is equal to the sound speed (v = c). It has been identified for the experiment [9] that t_c ≃ 4s when v = c and it is consistent with the value quoted according to the results of S(t) in Fig. 3.

Finally we investigate in details whether a localization can be seen in the oscillation experiment. In a semi-log plot, Fig. 4(a) shows the eventual spatial density distributions at t = 7.3s. To smoothen the spikes arising from

FIG. 4. (a) In a semi-log plot, for the case ξ < σ_D the eventual density distribution at t = 7.3s is shown to exhibit an algebraic profile at 20 < |z| < 70. (b) A similar study for the case ξ > σ_D, where an AL exponential profile is obtained for the eventual density distribution at t = 3.7s. The fitting Lyapunov exponent is γ_{eff} = 0.025.

randomness, the results are taken as the average over a period. As shown in Fig. 4(a), it is verified that for the current ξ < σ_D case the condensate is algebraically localized, in accordance with the previous theory [8]. As mentioned earlier, in the presence of random disorder, the condensate is actually separated into both localized and extended parts. In a free expansion experiment, the extended part will escape whereas the localized part will remain [6]. When a trapping potential is in place, the moving extended part is eventually stopped at the center of the trap, whereas the localized part comprises the long tails of the condensate. Fig. 4(a) shows a well-fitting curve |ψ(z)|^2 ∼ |z|^{−2} at the range 20 < |z| < 70. The lower bound is determined by the initial size of the condensate, i.e., the Thomas-Fermi radius R_{TF} = √ 2μ = 20, and the off-fitting data out of the range |z| > 70 is due to the trapping effect.

Can the AL be seen in a similar oscillation experiment? Here we perform another simulation for the same parameters except by reducing σ_D to 0.01 to make the regime ξ > σ_D. In this case, the relaxation time is t_c ≃ 2s only. As shown in Fig. 4(b), the results of the eventual density distributions at t = 3.7s are well fitted by an exponential one, |ψ (z)|^2 ∼ exp (−2γ_{eff} |z|) with γ_{eff} the Lyapunov exponent [8]. The fitting γ_{eff} is also in good agreement with the analytic one, γ_{eff} = (π/32ξ)(V_D /μ)^2(σ_D/ξ) exp[−(σ_D/ξ)^2] ≈ 0.025. Compared to the case ξ < σ_D, higher percentage of atoms can be localized in the case ξ > σ_D. Thus one sees that the fitting is as good as in the range 0 < |z| < 70. The off-fitting data out of the range is again due to the trapping effect.

In summary, we propose that Anderson localization can be observed in an oscillating condensate in a disordered trap when the system comes to an equilibrium and when the healing length of the condensate is exceeding the disorder correlation length. In addition, we show that in such an “isolated” system, the disorder plays the role as a medium and through it, the system undergoes a relaxation process from nonequilibrium to equilibrium. The occurrence of localization can thus be viewed as the development of thermalization in the system.

We are grateful to Randy Hulet for many useful comments. Financial supports from MOST, Taiwan (grant No. MOST 105-2112-M-003-005), JSPS KAKENHI (grant No. 17K05548) and MEXT KAKENHI/Fluctuation and Structure (grant No.16H00807), and NCTS of Taiwan are acknowledged.

∗ tsubota@sci.osaka-cu.ac.jp † wu@ntnu.edu.tw [1] P. W. Anderson, Phys. Rev. 109, 1492 (1958). [2] Y. Lahini, R. Pugatch, F. Pozzi, M. Sorel, R. Morandotti, N. Davidson, and Y. Silberberg, Phys. Rev. Lett. 103, 013901 (2009).

[3] M. Segev, Y. Silberberg, and D. N. Christodoulides, Nature Photonics 7, 197 (2013).

[4] H. Hu, A. Strybulevych, J. H. Page, S. E. Skipetrov, and B. A. van Tiggelen, Nature Physics 4, 945 (2008).

[5] J. Chabé, G. Lemarié, B. Grémaud, D. Delande, P. Szriftgiser, and J. C. Garreau, Phys. Rev. Lett. 101, 255702 (2008).

[6] J. Billy, V. Josse, Z. Zuo, A. Bernard, B. Hambrecht, P. Lugan, D. Clment, L. Sanchez-Palencia, P. Bouyer, and A. Aspect, Nature 453, 891 (2008).

[7] G. Roati, C. D’Errico, L. Fallani, M. Fattori, C. Fort, M. Zaccanti, G. Modugno, M. Modugno, and M. Inguscio, Nature 453, 895 (2008).

[8] L. Sanchez-Palencia, D. Clément, P. Lugan, P. Bouyer, G. V. Shlyapnikov, and A. Aspect, Phys. Rev. Lett. 98, 210401 (2007).

[9] D. Dries, S. E. Pollack, J. M. Hitchcock, and R. G. Hulet, Phys. Rev. A 82, 033603 (2010).

[10] A. Polkovnikov, K. Sengupta, A. Silva, and M. Vengalattore, Rev. Mod. Phys. 83, 863 (2011).

[11] R. Nandkishore and D. A. Huse, Annual Review of Condensed Matter Physics 6, 15 (2015).

[12] C. Gogolin and J. Eisert, Reports on Progress in Physics 79, 056001 (2016).

[13] Y. P. Chen, J. Hitchcock, D. Dries, M. Junker, C. Welford, and R. G. Hulet, Phys. Rev. A 77, 033632 (2008).

[14] L. Pezzé and L. Sanchez-Palencia, Phys. Rev. Lett. 106, 040601 (2011).

[15] S. G. Bhongale, P. Kakashvili, C. J. Bolech, and H. Pu, Phys. Rev. A 82, 053632 (2010).

[16] Z. Wu and E. Zaremba, Phys. Rev. Lett. 106, 165301 (2011).

[17] L. Pitaevskii and S. Stringari, Bose-Einstein Condensation and Superfluidity (Oxford University Press, 2016).

[18] S. Nazarenko, Wave Turbulence (Springer-Verlag Berlin Heidelberg, 2011).

[19] C. Connaughton, C. Josserand, A. Picozzi, Y. Pomeau, and S. Rica, Phys. Rev. Lett. 95, 263901 (2005).

[20] A. Picozzi, Opt. Express 15, 9063 (2007).

[21] C. B. S. R. A. P. Can Sun, Shu Jia and J. W. Fleischer, Nature Physics 8, 470 (2012).

[22] M. Guasoni, J. Garnier, B. Rumpf, D. Sugny, J. Fatome, F. Amrani, G. Millot, and A. Picozzi, Phys. Rev. X 7, 011025 (2017).