arXiv:1812.00034v3 [astro-ph.SR] 25 Jan 2019

DRAFT VERSION JANUARY 29, 2019 Typeset using L^ATEX twocolumn style in AASTeX62

Photometry and spectroscopy of faint candidate spectrophotometric standard DA white dwarfs

ANNALISA CALAMIDA,^{1, 2} THOMAS MATHESON,^1 ABHIJIT SAHA,^1 EDWARD OLSZEWSKI,^3 GAUTHAM NARAYAN,^{1, 2} JENNA CLAVER,^1 CLARE SHANAHAN,^2 JAY HOLBERG,^4 TIM AXELROD,^3 RALPH BOHLIN,^2 CHRISTOPHER W. STUBBS,^5 SUSANA DEUSTUA,^2 IVAN HUBENY,^3 JOHN MACKENTY,^2 SEAN POINTS,^6 ARMIN REST,^{2, 7} AND ELENA SABBI^2

1National Optical Astronomy Observatory - AURA, 950 N Cherry Ave, Tucson, AZ, 85719, USA 2Space Telescope Science Institute - AURA, 3700 San Martin Drive, Baltimore, MD 21218, USA 3Steward Observatory, University of Arizona, 933 N Cherry Ave, Tucson, AZ, 85719, USA 4Lunar and Planetary Laboratory, University of Arizona, 1629 E University Blvd, Tucson, AZ 85721, USA 5Harvard University, 17 Oxford Street, Cambridge MA 02138, USA 6Cerro Tololo Inter-American Observatory, Casilla 603, La Serena, Chile 7Department of Physics and Astronomy, Johns Hopkins University, Baltimore, MD 21218, USA

ABSTRACT We present precise photometry and spectroscopy for 23 candidate spectrophotometric standard white dwarfs.

The selected stars are distributed in the Northern hemisphere and around the celestial equator and are all fainter than r ∼ 16.5 mag. This network of stars, when established as standards, together with the three Hubble Space Telescope primary CALSPEC white dwarfs, will provide a set of spectrophotometric standards to directly calibrate data products to better than 1%. These new faint standard white dwarfs will have enough signalto-noise ratio in future deep photometric surveys and facilities to be measured accurately while still avoiding saturation in such surveys. They will also fall within the dynamic range of large telescopes and their instruments for the foreseeable future. This paper discusses the provenance of the observational data for our candidate standard stars. The comparison with models, reconciliation with reddening, and the consequent derivation of the full spectral energy density distributions for each of them is reserved for a subsequent paper.

Keywords: Stars - Photometric calibration - Standards

1. INTRODUCTION Astrophysics is at the threshold of an era of deep imaging surveys of large portions of the sky, both from the ground and from telescopes in space. Projects like the Sloan Digital Sky Survey (SDSS), Pan-STARRS (PS) the Dark Energy Survey (DES), Skymapper, ATLAS, ASAS-SN, GALEX and WISE are either complete or in their advanced stages, while the Zwicky Transient Facility (ZTF) has just begun and the Large Synoptic Survey Telescope (LSST) is only a few years away.^1 GAIA and Kepler continue to report photometry of millions of stars to very high internal accuracy. These projects have their own native pass-bands and photometric systems with some being similar and others differing significantly. In order to make the information across these projects commensurate with one another, we must put them on a common photometric system. We therefore need a set of calibration references,

Corresponding author: Annalisa Calamida calamida@stsci.edu

1 A table with a list of all acronyms used in the manuscript is presented in the Appendix.

with which both existing and future surveys can be crosscalibrated. Specifically, we seek to establish a set of standard stars which satisfy the following criteria:

1. They must have relative spectral energy distributions (SEDs) established to sub-percent accuracy, and preferably to better than half-percent;

2. They must fall within the dynamic range of most, if not all, extant and future deep surveys. We surmise that these stars should be fainter than r ∼ 16.5 mag, which also puts them within the dynamic range of large largeaperture telescopes;

3. They must be distributed across the sky so that they are naturally observed in past, present and future surveys, making it possible to retroactively re-calibrate photometry onto a common (spectro)-photometric scale. This will allow the direct collation of photometry from different surveys with their own respective native passbands onto a commensurate platform. For other investigations, a few of the standards will always be available from any observatory at any point in time.

2 CALAMIDA ET AL.

Sub-percent global photometric standardization has proven challenging in the past, but is in high demand for several ongoing scientific endeavors. It is the major source of uncertainty in the use of Type Ia supernovae as probes of the history of cosmic expansion to infer the properties of the dark energy (Betoule et al. 2014; Scolnic et al. 2015; Stubbs & Brown 2015). Experiments that require accurate and reliable photo-redshift determination, such as weak lensing tomography and baryonic acoustic oscillation analysis with LSST (Gorecki et al. 2014), are also limited by systematic uncertainties arising from their relative photometric calibration.

The chief obstacle for calibrating standard stars with high accuracy from the ground by comparing them to laboratory sources is the uncertainty in atmospheric extinction. Groundbased survey accuracy is limited by the transmissivity of the atmosphere with both chromatic (Rayleigh scattering, ozone, Mie scattering, molecular absorption, aerosol) as well as "gray" (clouds) terms varying on small angular and temporal scales. A variety of methods are used to track and account for such effects including monitoring (e.g., LIDAR, GPS), and there are many efforts to model the atmosphere (e.g., with MODTRAN, Burke et al. 2014). It would be ideal to place laboratory sources above the terrestrial atmosphere, but this is unlikely to happen in the near future. For a more detailed discussion about problems related to obtaining a subpercent accurate calibration please see Narayan et al. (2016, hereafter NA16).

We therefore seek extra-terrestrial sources for which we can predict the SED to higher accuracy than the uncertainty in predicting the transmissivity of the terrestrial atmosphere. The best such class of celestial objects we can hope to characterize and model are hot DA white dwarfs (DAWDs). These stars have almost pure hydrogen atmospheres, so they are the simplest stellar atmospheres to model: their opacities are known from first principles, at temperatures greater than ∼ 20,000K the photospheres are purely radiative, and they are photometrically stable.

The intrinsic DAWD SED can be described by two parameters: effective temperature, T_{e f f} , and surface gravity, log(g), both of which can be measured spectroscopically from a detailed analysis of the Balmer line profiles, without using photometry. The SED can then be modeled from the ultra-violet (UV) to the near-infrared (NIR) and projected through the transmission of any imager or spectrometer at arbitrary resolution. Only the extinction towards the observed DAWDs and the overall flux normalization needs to be established.

Bohlin (2000) and Bohlin et al. (2014, hereafter B14) implemented the pure-hydrogen-WD method of flux calibration using three DAWDs, G191B2B, GD153 and GD71 (Hubble Space Telescope (HST) primary WDs). These stars are brighter than V ∼ 13.5 mag, span a range of temperatures 30,000 ≲ T_{e f f} ≲ 60,000, and are un-reddened as a result of their proximity to us. B14 found their relative flux distributions to be internally consistent with model predictions (Gianninas et al. 2011; Rauch et al. 2013) from spectroscopic T_{e f f} and logg to better than 1% in the wavelength range 0.2 - 0.9 μm. Spectrophotometry of Vega with STIS (Bohlin & Gilliland 2004; Bohlin 2007) referred to the DAWD flux scale shows agreement with the Hayes et al. (1985) calibration at the 1 to 2% level, and with the Kurucz^2 Vega atmosphere model to better than 1% in the wavelength range 0.5 - 0.8 μm, but disagrees by 5% at 0.4 μm, and by 10% between 0.9 and 1.0 μm, illustrating the limitation of empirical ground-based methods.

The internal consistency of the DAWD observations and models (≤ 5 mmag) in the wavelength range 0.2 to 0.9 μm is superior to the ∼ 2% comparison with the best model for Vega (Kurucz at T_{e f f} = 9,400 K), which is a pole-on rapid rotator with an equatorial dust disk. The zero-point for the HST photometric system is defined by the flux of 3.44×10^{-9} erg·cm^{-2}· s^{-1} · Å^{-1} for Vega at 0.5556 μm, as reconciled with the MSX mid-IR absolute flux measures (B14, and Bohlin 2014). Absolute fluxes for the three HST primary WDs are determined by the normalization of their modeled SEDs by their respective relative responses to Vega, using STIS precision spectrophotometry of all four stars, Vega, G191B2B, GD153 and GD71, and the 3.44×10^{-9} erg·cm^{-2}· s^{-1} · Å^{-1} flux of Vega at 0.5556 μm. This method provides the basis for HST’s entire calibration system (CALSPEC^3).

Holberg & Bergeron (2006) used synthetic photometry of DAWDs in the magnitude range 10 ≲ V ≲ 16.5 to place UBV RI, 2MASS JHK, SDSS ugriz and Strömgren ubvy magnitudes on the HST photometric scale to 1%. Later, Holberg et al. (2008) confirmed this calibration by using a set of DAWDs in the same magnitude range with well-measured trigonometric parallaxes that agreed at the 1% level with their photometric parallaxes from the Bergeron photometric grid. However, the DAWDs in use to date are still too bright for modern deep surveys and large telescopes.

In order to provide flux standards in the dynamic range of large aperture (d > 4m) telescopes, we obtained Wide Field Camera 3 (WFC3) HST imaging and ground-based spectroscopy for the three HST primary (CALSPEC) standards, G191B2B, GD153, and GD71, along with 23 DAWDs fainter than r ∼ 16.5 mag, at equatorial and northern latitudes. The need for practical faint standards, useful over the optical and near-UV, makes consideration of the effects of interstellar extinction unavoidable. Indeed, interstellar medium extinction must be incorporated into the definition of the

2 http://kurucz.harvard.edu/stars/vega/ 3 http://www.stsci.edu/hst/observatory/crds/calspec.html

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 3

Figure 1. A Hammer-Aitoff projection of the 23 candidate spectrophotometric standard DAWDs observed with HST in cycles 20 and 22 in equatorial coordinates (blue stars). The three HST primary CALSPEC standards are marked with a large white star and four spectroscopic flux standards (secondary standards) are marked with a small white star.

SEDs of all faint flux standards. Fortunately, as sub-luminous stars, DAWDs are the optimal choice; simultaneously offering minimal extinction columns and wide wavelength coverage, from the far UV to the IR.

The current paper presents our analysis of photometric and spectroscopic data collected for the candidate spectrophotometric DAWDs. Preliminary results of the temporal photometric monitoring campaign of the DAWDs are also presented. Photometric and spectroscopic data are examined to determine the suitability of each of the 23 candidates as SED standards. The joint analysis of photometry and spectroscopy and the derivation of SEDs and reddening to each of these objects is reserved for a subsequent paper (Narayan et al. 2019, submitted, hereafter NA19).

The structure of the current paper is as follows. In §2 we discuss the criteria used to select candidate spectrophotometric standard DAWDs and in §3 we illustrate the photometric observations and the image processing strategy. In §4 we describe the photometric reduction procedures and in §5 the stability monitoring observations for the candidate standards. In §6 the spectroscopic data reduction strategy is described and in §7 we discuss how our photometry is calibrated and normalized. We summarize the results in §8.

2. CANDIDATE SPECTROPHOTOMETRIC STANDARD STAR SELECTION Candidate spectrophotometric standard DAWDs were selected from the SDSS (Adelman-McCarthy et al. 2008; Girven et al. 2012; Kleinman et al. 2013) and the Villanova catalog (McCook & Sion 1999), with the requirement of being spectral type DA, hotter than ≈ 20,000 K, and fainter than r ∼16.5 mag. We selected an adequate number of stars to uniformly cover the sky around the celestial equator and in the Northern hemisphere. The final sample consists of 23 candidate standard DAWDs. Table 1 lists the properties of the selected stars and the three HST primary CALSPEC standards (GD71, GD153, G191B2B), including spectral type, proper motions and distances from the GAIA data release 2 (DR2, Gaia Collaboration et al. 2018).

Fig. 1 shows a Hammer-Aitoff projection of the sky with the distribution of the HST primary (CALSPEC) standard WDs (large white stars) and the 23 selected candidate standard DAWDs (blue); four secondary flux standard stars used to calibrate spectra analyzed in the current paper are also shown in the figure as small white stars. The figure shows that candidate standards have an homogeneous coverage over the Northern hemisphere and the celestial equator with approximately 1 star every 2 hours.

We have a sample of candidate DAWDs for the Southern hemisphere for which spectra collected with the Goodman spectrograph on the SOAR telescope (CTIO) are available and HST photometry was collected during Cycle 25 (GO- 15113, PI: Saha). A subsequent paper will present photometry and spectroscopy for these new candidates. The final goal is to provide an all-sky set of sub-percent precision spectrophotometric standards so that at least 3 of these stars are visible at any time from any observatory at airmass less than 2. Preliminary effective temperatures and gravities to select candidate spectrophotometric standards were retrieved from

4 CALAMIDA ET AL.

Figure 2. Te f f vs log(g) plane for 22 selected DA white dwarfs (black dots) and the three HST primary CALSPEC standards G191B2B (yellow diamond), GD153 (magenta square), and GD71 (cyan pentagon).

the SDSS and the Villanova catalogs. The ground-based spectra collected by us using different facilities will be used to derive more accurate temperatures and gravities for all the DAWDs as described in section 6. The HST primary WDs and the candidate standards are plotted in the T_{e f f} vs log(g) plane in Fig. 2. For star WD0554-165, T_{e f f} and log(g) measurements are not available in the literature. The figure shows that star SDSS-J172135.97+294016.0 is much cooler compared to the other DAWDs, with an effective temperature of T_{e f f} = 9,261 K(see Table 1). This star was included in the sample because of an early decision before we restricted ourselves to purely radiative atmospheres with temperatures T_{e f f} > 20,000 K. The observations and data reduction for this star were carried through, but this object will no longer be included in the network of standard DAWDs.

We matched the list of candidates with PS Data Release 2 catalog (Chambers et al. 2016; Flewelling et al. 2016) and obtained g,r,i,z aperture photometry magnitudes for all the stars. These data will be later used to check the the stellar density around the candidate standards. We also retrieved GAIA DR2 G,Bp,Rp magnitudes for the DAWDs. PS and GAIA sets of magnitudes are listed in Tables 2 and 3, respectively.

Fig. 3 shows the Bp-Rp, F475W -F775W color-color diagram for the 23 candidate standard DAWDs (black dots) and the three primary standards, G191B2B (yellow diamond), GD153 (magenta square) and GD71 (cyan penthagon). Photometry in the HST filters is from this work (see section 7 and Table 9). The selected candidate standards and the primary HST WDs cluster along a well-defined sequence and have colors in the range -0.6 ≲ Bp - Rp ≲ -

Figure 3. Bp-Rp, F475W -F775W color-color diagram for the 23 selected DA white dwarfs (black dots) and the three HST primary standards, G191B2B (yellow diamond), GD153 (magenta square), and GD71 (cyan pentagon).

0.1 and -0.4 ≲ F475W - F775W ≲ 0 mag, excluding star SDSSJ172135.97+294016.0, ∼ 0.3-0.4 mag redder than the rest of the WDs, which is the cool DAWD included in our sample, as explained before.

3. PHOTOMETRIC OBSERVATIONS Photometric data discussed in this investigation were collected with the WFC3 UVIS and IR cameras on board the HST during Cycle 20 and 22 (proposals GO-12967 and GO- 13711, PI: Saha). Observations were taken in five filters in Cycle 20, namely F336W, F475W, F625W, F775W, F160W. In Cycle 22 the near UV filter F275W was added, to better characterize the line-of sight extinction and the reddening law towards the observed stars.

Nine of the candidate DAWDs are distributed along the celestial equator (hereinafter equatorial DAWDs) and were observed in both Cycle 20 and Cycle 22, while the other fourteen DAWDs and the three HST primary CALSPEC standards were observed only in Cycle 22. Cycle 20 observations of the nine equatorial DAWDs were used in NA16 to demonstrate the effectiveness of our method to establish a network of spectrophotometric standards. We repeated the observations of these stars in Cycle 22 to improve the precision of the photometry. Moreover, photometry of the equatorial DAWDs will be used to determine the photometric offset between the two observing cycles. The HST primary CAL- SPEC WDs were observed in Cycle 22 to allow us to directly tie the photometry of the 23 DAWDs to the HST photometric system.

Exposure times for our observations range from 1 to 220s for the F275W filter, 1 to 160s for F336W, 1 to 160s for

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 5

F475W, 1 to 355s for F625W, 1 to 680s for F775W, and 3 to 499s for F160W. Table 4 lists the log of the observations for Cycle 20 and 22.

Observations span a time interval of about 1 year for Cycle 20 (November 2012 until September 2013) and about 1.3 year for Cycle 22 (September 2014 until January 2016), with the HST primary CALSPEC WDs observed at the beginning and the end of Cycle 22 to track the change in sensitivity of the telescope and instrument system.

For the nine equatorial DAWDs, three dithered exposures in F336W and F475W, and two exposures for the other filters were collected in Cycle 20. The same targets were observed in Cycle 22 with a cosmic ray split of 3 exposures for F275W, and one exposure was added for the other filters. Summarizing, a total of three exposures for each of the WFC3 filters were collected for the nine equatorial DAWDs. At least three exposures per filter are needed to check consistency in the photometry at sub-percent precision: WFC3 images are affected by cosmic rays (CRs) and different detector artifacts, such as hot and bad pixels, blobs, ghosts. As an example, images in six filters for star SDSSJ232941.330+001107.755 are shown in Fig. 4. If a star has discrepant measurements in two exposures, the third image will allow us to identify the outlier measurement and discard the affected exposure.

The other fourteen WDs were observed only in Cycle 22, by collecting 5 to 7 dithered exposures for each filter. The HST primary CALSPEC standards were observed in Cycle 22 with 6 to 8 exposures per visit, for a total of 3 visits (18 to 24 exposures) in all filters, spanning an average time interval of about 1 year and 3 months, from September / November 2014 to November 2015 / January 2016. For more details on the observation strategy please see the log in Table 4.

Parallel observations with the Advanced Camera for Surveys (ACS) in the F475W and F775W filters were collected, including stars a few arcminutes away from the candidate spectrophotometric standards. The analysis of these images and an evaluation of the usefulness of the observed stars as supplementary standard stars will be presented in a forthcoming paper.

3.1. Image processing WFC3 UVIS images for Cycle 20 and Cycle 22 were processed with version 3.3 of the WFC3 calibration pipeline (cal_wf3) that treats the two chips, UVIS1 and UVIS2, individually (Deustua et al. 2017). The image photometry reference table (IMPHTTAB) used is z7n21066i_imp.fits and writes PHOTFLAM values for a 10 pixel aperture (Deustua et al. 2016). A newer IMPHTTAB file was released in June 2017, which provides PHOTFLAM values for an infinite aperture, but it was not used to reduce our dataset. Cycle 20 images were collected by using the full

UVIS1 aperture (UVIS1-FIX), with the target star placed in its center. Few pixel dithered exposures were collected to correct for detector artifacts and CRs (see the observation log in Table 4). The sub-array UVIS2-C512C-SUB aperture was used for Cycle 22 observations, with the target star placed in its center and the exposures dithered by a few pixels (less than ∼ 20). This allowed us to place the WDs closer to the read-out amplifier to mitigate the charge transfer inefficiency effects.

Starting from version 3.3, the WFC3 calibration pipeline scales UVIS2 fluxes to the UVIS1 chip by default. Therefore, we manually re-processed all the images with cal_wf3 by setting FLUXCORR = OMIT in the header to avoid the flux scaling and to keep the photometry on the UVIS2 detector system. The scale factor between Cycle 20 UVIS1 and Cycle 22 UVIS2 photometry will be estimated and applied to the measured magnitudes later (see Section 4.4).

All WFC3-UVIS images were corrected for Charge Transfer Efficiency (CTE) by using the official WFC3 software^4 and the WFC3 Pixel Area Map (PAM) was applied^5 to correct for differences in the area of each pixel in the sky due to the geometric distortion of WFC3-UVIS.

WFC3 infrared (WFC3-IR) images were collected by using the full camera aperture (IR-FIX) and placing the targets at the center of the detector with every exposure dithered by 10 to 20 pixels. This strategy was used to avoid selfpersistence. For the three primary WDs, observations were collected by using the IRSUB256-FIX and the IRSUB512- FIX sub-apertures to allow more exposures in the same orbit. Images were processed with the cal_wf3 calibration pipeline and the WFC3 PAM was applied.

4. OPTIMAL EXTRACTION OF THE WHITE DWARF PHOTOMETRY Following a series of tests, we have discovered that the individual WFC3 images cannot be combined in the standard pipeline reduction and be expected to yield measurements with milli-mag level uncertainties. In particular, the anticoincidence method of eliminating CR events can affect the cores of stars. In reducing Cycle 20 WFC3 data, NA16 found that combining images with the drizzle algorithms (Drizzle Pac^6), by using the pipeline default input parameters, is not suitable for our purpose. While drizzling eliminates CRs, it introduces noise by over-correcting for differences in the cores of bright stars. Therefore, in order not to compromise the quality of the good images, where the target star is unaffected by a CR in its measuring aperture, we had to manually discard any image with a CR event over the measurement

4 htt p : //www.stsci.edu/hst/w f c3/ins_ per f ormance/CT E 5 htt p : //www.stsci.edu/hst/w f c3/pam/pixel_area_maps 6 htt p : //drizzlepac.stsci.edu/

6 CALAMIDA ET AL.

Figure 4. WFC3 FLC images in six filters for the DA white dwarf SDSSJ232941.330+001107.755. The scale of the image and the North and the East directions are shown in the bottom right panel. CRs and different detector artifacts, such as hot and bad pixels are visible in all images.

aperture on those few occasions it happened (3-4 % of the total number of images).

Our current reduction strategy thus involved performing photometry on the individual CTE-corrected images (FLC) for the WFC3-UVIS detector, and on the FLT images for WFC3-IR, after having applied the PAM correction. We had to check all the ∼ 800 images for the presence of a CR event inside the star aperture radius: this was a rather tedious procedure but it allowed us to obtain a sub-percent accurate photometry for our set of standard stars.

We used three completely independent packages to perform aperture photometry on all the images:

1) Source Extractor (Bertin & Arnouts 1996, hereafter SExtractor); 2) DAOPHOTIV (Stetson 1987, hereafter DAOPHOT); 3) ILAPH (an IDL based interactive program for aperture photometry and growth curve analysis written by A. Saha, customized for the data at hand).

Performing photometry by using different packages may generate systematic differences in the results. Our strategy will then enable us to track down possible systematic issues due to the data reduction method used. Moreover, it will allow us to determine realistic uncertainties, which is of paramount importance for our study, since analysis downstream depends on these for weights.

After analyzing photometric growth curves for a sample of faint and bright WDs, we found the optimal aperture radius for the photometry to be 7.5 pixels for the WFC3-UVIS images and 5 pixels for the WFC3-IR images, i.e. ∼ 0.^{′′}3 and ∼ 0.^{′′}65, respectively. The local sky background for each source was estimated in a rectangular region (SExtractor) and a circular (DAOPHOT, ILAPH) annulus around the aperture centered on the star. In the case of SExtractor the box has a size of 20 pixels and the sky background in this region is estimated as a modified mode (2.5×Median - 1.5×Mean) after an iterative sigma-clipping rejection of the outlier pixels. DAOPHOT uses the mode (3.0×Median - 2.0×Mean) as the best sky estimator after an iterative sigma-clipping rejection of the outliers. However, in non-crowded stellar fields, if the mean sky value in the selected annulus is smaller than the median, than the mean of the sky value is used as best sky estimate. In this case, we used an annulus with radii r_{in} = 156 and r_{out} = 165 pixels around the target DAWDs. We selected these values since 156 pixels corresponds to ∼ 6^{′′} and it can be considered to infinity relative to the star’s position.

ILAPH was configured to use the median sky value in the selected annulus around the stars as the best sky estimator. This is more robust than the mean, since the latter is vulnerable to the presence of contaminating objects in the annular sky aperture. For UVIS, an aperture radius of 7.5 pixels and an annulus with radii r_{in} = 20 and r_{out} = 30 pixels was used for the sky. While this measurement procedure disregards light outside the respective apertures due to the extended skirt of the stellar Point-Spread-Function (PSF), it is asserted that the skirt affects all stars equally, and as long as we measure the

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 7

Figure 5. Comparison of DAOPHOT and ILAPH aperture photometry magnitudes, Δ Mag = MagDAOPHOT - MagILAPH , in six filters as a function of DAOPHOT magnitude, for the 23 candidate spectrophotometric DAWDs and the 3 HST primary CALSPEC standards. The mean magnitude differences with the relative dispersions are shown.

8 CALAMIDA ET AL.

bright HST primary CALSPEC standards in exactly the same way as our target DAWDs, we are measuring instrumental magnitudes that all share a common zero-point offset. For the IR images (F160W), ILAPH was used in the same way, but with aperture radius of 5 pixels and a sky aperture annulus from 14 to 21 pixels. The sky apertures were chosen with some experimentation: stability in the measured instrumental magnitude values from image to image for the same object was used as the criterion for selection. The program also looks at the pixel to pixel scatter within the annular sky aperture, and propagates that variance into the measurement error estimate. ILAPH was customized to use the actual fluctuation in the sky background, not from just the shot noise (Poisson statistics) of the adopted sky brightness, in the calculation of photometric uncertainty. Subsequent analysis utilizes the uncertainties as weights, so it is crucial to get this estimate to be as realistic as possible.

An accurate estimate of the sky background is fundamental for our analysis. In particular, a wrong estimate of the sky background has a greater effect on the faintest DAWDs and can introduce a systematic bias in the measurements. Fig. 5 shows the comparison between the measurements in the six filters, F275W, F336W, F475W, F625W, F775W, and F160W, obtained with DAOPHOT and ILAPH (Δ Mag = Mag_{DAOPHOT} - Mag_{ILAPH} ) for all the observed DAWDs as a function of the measured DAOPHOT magnitude. The single epoch magnitudes, corrected for the instrumental effects, including the sensitivity difference between Cycle 20 and Cycle 22, were averaged as described in Section 7.

The plot shows that measured aperture magnitudes with DAOPHOT and ILAPH are, within uncertainties, in very good agreement, with a biweight mean difference less than 0.003 mag in all filters, and with a dispersion less than 0.003 mag for all UVIS filters and less than ∼ 0.003 mag for F160W. A couple of stars, SDSSJ102430.93-003207.0 and SDSSJ172135.97+294016.0, show very large uncertainties, ∼ 0.02 and 0.04 mag, respectively, in the F275W and the F336W filters. The first DAWD was problematic already in NA16 Cycle 20 measurements, and is a candidate variable (see Section 7.1). Star SDSSJ172135.97+294016.0. has no clear problems on the images, but an undetected faint CR falling on the aperture radius could be the culprit. However, this star is already excluded from our set of spectrophotometric standards due to its low effective temperature (T_{e f f} ∼ 9,000 K), so we do not investigate this issue further.

The same comparison is performed for all the measurements obtained with DAOPHOT and SExtractor in Fig. 6, where Δ Mag = Mag_{DAOPHOT} - Mag_{SExtractor}. In this case, the measurements agree quite well within uncertainties but on average, they have a larger dispersion, up to 0.005 mag for F275W. Moreover, a slight trend with magnitude is present, with SExtractor magnitudes being fainter at fainter magnitudes.

To further investigate this issue, we produced a matrix comparison of the three data reduction methods in Fig. 7. Each depicted box is color-scaled according to the weighted magnitude difference between two of the three methods, estimated as:

ΔMag = (Mag_{meth1} - Mag_{meth2})/ √ err^2_{meth1} + err^2_{meth2} (1)

where Mag_{methX} and err_{methX} are the magnitudes and magnitude errors for each method, respectively.

Each box corresponds to a star measured in one of the six filters, sorted by magnitude (brightest on the left of the matrix), and the numeric text value is the magnitude difference, in milli-mag, between the measurements of the two methods. The color of the box is bluer when the weighted magnitude difference between the two methods is negative, i.e., when the magnitude of the first labeled method is brighter compared to the magnitude of the second method, while is red when the weighted magnitude difference is positive. The text in the boxes is larger and white when the difference in magnitude between the two methods is larger than 2σ, i.e., significant compared to photometric errors.

The middle panel of the figure confirms that ILAPH and DAOPHOT provide very comparable results within the uncertainties, with no significant magnitude difference for all the measured stars in all filters. However, for fainter stars (right section of the matrix), a very slight trend with color is present, in the sense that these stars are fainter in the redder filters (F625W, F775W, and F160W) when measured with DAOPHOT (redder boxes on the bottom right of the panel). On the other hand, this trend is well within the uncertainties of the measurements.

The top and the bottom panels of Fig. 7 confirm that SExtractor magnitudes are systematically fainter compared to ILAPH and DAOPHOT magnitudes in all filters, as suggested by Fig. 6 (bluer boxes in the panels). This difference has either a magnitude and a color effect: 1) magnitudes for brighter stars seems to agree between SExtractor and the other two methods, or to be brighter when measured with SExtractor (left part of the panels), while fainter stars are fainter when measured with SExtractor (right part); 2) the discrepancy is larger for the bluer filters (F275W and F336W, top part).

To understand the current discrepancy, we compared the sky background values estimated with the three different methods. SExtractor local sky background shows systematically higher values when compared to DAOPHOT and ILAPH sky values. This difference in sky values is larger at fainter magnitudes, making SExtractor magnitudes fainter

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 9

Figure 6. Same as Fig. 5 but for DAOPHOT and SExtractor magnitudes, Δ Mag = MagDAOPHOT - MagSExtractor .

10 CALAMIDA ET AL.

Figure 7. Comparison matrix between magnitudes measured with ILAPH, DAOPHOT and Source Extractor for the 23 candidate standard DAWDs and the 3 HST primary CALSPEC stars in all the WFC3 observed filters. The color scale is labeled at the bottom of each panel and the name of the stars is marked at the top of the panels. Stars are sorted by g-band magnitude, starting with the brightest on the left. Filters are labeled on the left of each panel. The color of the box is bluer when the weighted magnitude difference between the two methods is negative, i.e., when the magnitude of the first labeled method is brighter compared to the magnitude of the second method, while is red when the weighted magnitude difference is positive. See text for more details.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 11

for fainter stars. On the other hand, DAOPHOT and ILAPH sky values agree quite well within the uncertainties.

4.1. IR photometry The WFC3-IR detector is affected by persistence, i.e. the residual signal of a large incident light level that can last on the images from minutes to days (Long et al. 2011, 2013; Gennaro et al. 2018). Some of our observations could have been scheduled after IR observations that cause persistence, or bright objects in the images could cause persistence in the same exposures. To verify this we checked all images for the level of external (due to previous observations), or internal (due to objects in the same exposure) persistence by using the available WFC3 persistence tool^7. The search revealed that none of our observations is heavily affected by external or internal persistence, with the fraction of pixels with a residual signal larger than 0.01 e^-/s being less than 0.1%. Note that the dark current signal for WFC3-IR is 0.04 e^-/s. Three visits, one for star G191B2B, one for GD153 and one for SDSSJ181424.075+785403.048, have a fraction of pixels with a residual signal larger than 0.01 e^-/s of 0.16, 0.25 and 0.33%, respectively, due to external persistence. However, the affected pixels do not overlap with the target DAWDs location, being more than 50 pixel away. Internal persistence is not an issue for all our observations. Brighter stars, such as the three primary WDs, could cause self-persistence on the IR images. In order to avoid that, we dithered each exposure by more than 10 pixels as recommended by the WFC3 team.

Another issue affecting IR observations is the count-rate non-linearity (CRNL), that is the non-linearity of the detected counts with the total incident flux on the camera. This effect can be relevant for our observations since the target DAWDs cover a range of more than 10 magnitudes. The CRNL was characterized for the WFC3-IR camera by Riess (2010), Riess & Petro (2010), and Riess (2011), and who measured 0.010±0.0025 mag per dex for the F160W filter. The net effect of CRNL is that photometry of very faint stars, i.e. background dominated, appears fainter (Riess & Petro 2010). An accurate characterization of the CRNL for the program IR photometry, based on the observations and on models, will be provided in NA19. We do not apply any CRNL corrections on the photometry presented in this paper.

4.2. Shutter shading The accuracy of the measured magnitudes on WFC3-UVIS could be affected by the shutter shading effect. For the brightest stars in our sample we used very short exposures times (t < 2s). For these short times, shutter vibration can affect the actual duration of the exposures, leading to fainter measured magnitudes on the image. This effect was studied

7 https://archive.stsci.edu/prepds/persist/search.php

Figure 8. Aperture magnitudes in the F336W filter for star G191B2B measured with the shutter blade A (black points) and B (red) plotted versus the epoch. Error bars are labeled. The standard deviation of the measurements for the two blades is also shown.

in detail by the WFC3 team and discussed in different Instrument Science Reports (Hilbert 2009; Sabbi 2009; Sahu et al. 2014, 2015). Shutter vibrations in short exposures also results in a broadening of the observed PSF. When observing by using the shutter blade B, the Full-Width-Half-Maximum of the stellar images is systematically larger than when using the blade A. The larger shutter vibrations when using blade B can introduce a flux measurement uncertainty up to ∼ 2% for photometry performed with aperture radii smaller than 5 pixels (Sabbi 2009).

For our WFC3-UVIS data, we used an aperture radius of 7.5 pixels and so shutter shading should not affect images collected by using blade B. However, we checked for the presence of this effect on the images of the brightest of the primary CALSPEC standards, G191B2B. The selected F336W images were collected in a sequence of 1.0 second exposures alternating the two shutter blades (ABAB...). Fig. 8 shows instrumental aperture magnitudes in the F336W filter for G191B2B measured with the shutter blade A (black points) and B (red) plotted versus the observing epoch.The standard deviation of the measurements is 0.005 and 0.004 mag for blade A and B, respectively. The plot shows that there is not significant difference between magnitudes measured on images collected by using blade A or B. We performed the same experiment for G191B2B images collected with the other UVIS filters and obtained similar results.

The exposures times for the other DAWDs are longer than for G191B2B (see the observing log in Table 4), so we did

12 CALAMIDA ET AL.

not verify for shutter blade effects in all the other observations and we can safely assume that none of the exposures is affected.

4.3. Testing photometry for crowding effects Another factor that could affect the accuracy of measured magnitudes is the presence of unseen neighbor stars in the DAWD aperture radius. To test this hypothesis, we performed some artificial star (AS) tests simulating stars of different brightness with centroids from 0 to 5 pixels away from the DAWD. We simulated stars from 3 to 7 magnitudes fainter than the DAWDs. Results of the simulations show that AS more than 6 mag fainter than the target DAWD falling in the 7.5 pixel aperture radius do not affect the measured magnitudes. On the other hand, brighter neighbor stars falling inside the aperture radius could affect the photometry of the target DAWD by adding ∼ 1% of noise to the measurement.

However, our candidate standard DAWDs are in sparsely populated stellar fields and the observed WFC3 sub-array field of view (FoV) is ∼ 20^{′′}. We checked the PS catalog to look for the presence of other stars in the observed FoV and found only the target DAWDs or a maximum of other two objects (well outside the aperture radius) down to the PS detection limit (g ∼ 23 mag), so more than 5 magnitudes fainter than our targets. We can then safely assume that the photometry of the DAWDs is not affected by contamination of unseen neighbor stars.

4.4. Magnitude offset between the HST observing cycles Images in the five filters F336W, F475W, F625W, F775W, and F160W were collected in Cycle 20 and Cycle 22 for the nine equatorial WDs. For this subset of targets we then have two sets of measurements. Because the primary CALSPEC WDs, which anchor our photometry to the HST system, were only observed in Cycle 22, we need to estimate the magnitude offset between the two cycles and calibrate Cycle 20 measurements to Cycle 22. Cycle 20 observations were performed by using the full UVIS1 aperture, while Cycle 22 exposures were collected with a UVIS2 subarray. The magnitude offset needs to take into account the difference due to observing with two different WFC3 detectors and all the effects due to observations taken more than 2 years apart.

Fig. 9 shows the comparison between Cycle 20 and Cycle 22 magnitudes in the five filters for the nine equatorial WDs. Star SDSSJ102430.93-003207.0 has very discrepant measurements in the F775W filter (Δ Mag ∼ -0.21); NA16 claim that this WD might be variable. The same applies to star SDSSJ203722.169-051302.964, where the F160W measurements are in strong disagreement between the two observing cycles (Δ Mag ∼ 0.27). The spectrum of this WD shows emission features in the core of the Balmer absorption

Figure 9. Comparison of Cycle 20 and Cycle 22 average magnitudes measured with DAOPHOT in six filters, namely F275W , F336W , F475W , F625, F775W , and F160W for nine equatorial WDs. The weighted mean magnitude differences between the two observing cycles with the relative errors are also labeled.

lines, indicating the presence of a low-mass companion star (see § 6 for more details). Both stars were removed from the sample to estimate the magnitude offset.

The offsets are between ∼ 0.005 and ∼ 0.03 mag, depending on the filter, with an average dispersion of 0.005 mag. Column 8 and 9 of Table 6 list the magnitude offsets and their uncertainties between the two HST observing cycles in the different filters.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 13

After having applied these magnitude offsets, we estimated the weighted mean instrumental magnitudes for all the 23 observed DAWDs based on the photometry of the two cycles.

5. PHOTOMETRIC STABILITY OF THE CANDIDATE STANDARD DAWDS In order to assess the 23 candidates as stable standards we monitored them by collecting time-series data with the Las Cumbres Observatory (LCO) network of telescopes (proposals LCO2016B-007, LCO2017AB-002, PI: Matheson).

WDs can vary due to several reasons, depending on their effective temperature, atmosphere abundance and presence of magnetic activity or of an unseen faint companion star.

Hydrogen-rich atmosphere WDs might present gravitymode pulsations around T_{e f f} ∼ 12,000 K (Fontaine & Brassard 2008, ZZ Ceti pulsators). Our DAWDs were selected to have temperatures (T_{e f f} ≳ 20,000 K) outside the ZZ Ceti instability strip, so we do not expect them to be pulsators (note that SDSS-J172135.97+294016.0 will be removed from the network of standards since it has T_{e f f} = 9,261 K). Strong magnetic fields can also cause flux variations in WDs with a time scale from hours to days. These variations can be due to magnetically confined "spots" of higher opacity modulating the stellar flux via stellar rotation (Dupuis et al. 2000; Holberg & Howell 2011). Alternately, magnetic variations can be due to to spots in the convective atmosphere (Brinkworth et al. 2004, 2013). However, the 23 candidate standard DAWDs have effective temperatures above ∼ 20,000 K, and their atmosphere are fully radiative, so they should not vary due to the presence of spots. Moreover, their spectra did not show Zeeman splitting of the Balmer lines indicative of the presence of a strong magnetic field (see §6). On the other hand, the selected DAWDs could still vary due to the presence of an unseen faint companion star, or to unknown factors, and we need to characterize the amount of flux variation, if present, before setting these stars as spectrophotometric standards. A recent study by Hermes et al. (2017), based on precise Kepler time-series photometry, showed that ∼ 97% of apparently isolated WDs are stable, or show less than 1% flux variations, and they can still be used as spectrophotometric standards. Hermes et al. sample included mostly DA WDs but also several heliumor carbon-dominated atmosphere WDs, with temperatures hotter than ∼ 8,000 K.

On the basis of the criteria used to select the 23 DAWDs and previous studies, we do not expect a large fraction of our candidate spectrophotometric standards to vary. However, these 23 DAWDs have not yet been subject to a consistent and well-defined observational campaign to demonstrate a lack of variability at a wide range of time scales. WFC3 observations are obtained within a short time frame for each target, and so they are unsuitable as tests of variation. Prior ground-based surveys (SDSS, PanSTARRS) also do not have the necessary temporal coverage, and GAIA does not provide variability constraints on these stars yet.

5.1. Time-series photometry LCO observations consist of a sequence of geometrically spaced exposures in the Sloan g filter, ranging from minutes to month-long time scales. A minimum of 20 exposures for each target were collected, spread over 2-3 months at different time intervals, for a total of about 800 images.

Point-Spread Function (PSF) photometry was performed with DAOPHOTIV/ALLSTAR (Stetson 1987) and ALL- FRAME (Stetson 1994). The average FWHM for each frame was measured by using Source Extractor to exclude observations affected by poor observing conditions or bad focus, and these handful of images were excluded from the analysis. All the exposures for each target were flux scaled to the best image, defined by the frame with the smallest average FWHM, which was used as a reference image. Light curves were then produced for each of the 23 targets.

In order to select candidate variables we used the Welch & Stetson (1993) variability index W :

W = √ 1 n(n - 1) n∑ i=1 m_i - m̄ σ_i (2) where m_i are the individual measurements and m̄ is the mean weighted magnitude of each identified object, and n is the total number of frames. The Welch-Stetson variability index was calculated for all the stars (from ∼ 500 to 1,000) in the field of view. A sample of stable comparison stars was selected for each of the 23 DAWD observation. This group of stable stars has a detection in every frame and a variability index, var index, ≤ 1.2, the sharpness of the PSF in the range - 0.5 < sharpness < 0.5, to exclude extended objects and CRs, and a proximity in magnitude to the target WD within ∼ 0.2 mag.

An absolute calibration of the photometry is not performed since our goal is to demonstrate the lack of variability of the candidate standard DAWDs. However, we need to take into account spurious flux variations due to instrumental and atmospheric effects (observations are performed with different telescopes and detectors and from different sites in different conditions). The light curves of the selected stable stars are then compared to the light curves of the WDs in the same field. The variation around the mean of the stable star magnitudes was averaged and the average 1-σ dispersion was estimated. This dispersion is used as a variability threshold for the systematic observational and instrumental effects.

Fig. 10 shows the single epoch minus the weighted mean instrumental magnitude as a function of the Heliocentric Julian Date (HJD) for WD0554-165 (black crosses); averaged and binned relative magnitudes for a set of stable stars of

14 CALAMIDA ET AL.

comparable instrumental magnitude in the same field of view are also plotted as a red shaded area. The selected comparison stars have a variability index less than 1.2 while the WD0554-165 has a variability index of 3.98. WD0554- 165 shows clear signs of variability, with variations of almost 0.2 mag and a measurement 1-σ dispersion of ∼ 0.05 mag, compared to the stable star dispersion of σ ∼ 0.01 mag. Fig. 11 shows the same plot but for a stable DAWD, SDSSJ235144.29+375542.6: its variability index is ∼ 1 and the dispersion of the measurement is ∼ 0.015 mag, smaller than the measurement dispersions for the stable stars, σ ∼ 0.018 mag.

The light curve for SDSSJ20372.169-051302.964, a candidate binary system from spectroscopic data, shows variability with a dispersion of the measurements of σ ∼ 0.04 mag, a factor of 4 larger than the comparison star measurement dispersion, σ ∼ 0.01 mag, thus confirming its binary nature.

Other two stars in the sample, SDSSJ010322.10-002047.7 and SDSSJ102430.93-003207.0, show hints of variability but more and deeper exposures are needed to confirm these preliminary results.

Stars SDSSJ20372.169-051302.964 and WD0554-165 will be excluded from our network of spectrophotometric standard DAWDs due to their variable nature.

A more detailed analysis of the LCO photometry and the DAWD light curves will be presented in a forthcoming paper. We also plan to follow-up the candidate variable DAWDs with more observations from a larger ground-based telescope to understand the origin of their variability.

6. SPECTROSCOPIC OBSERVATIONS Spectra of the DAWDs are used to determine T_{e f f} and log g. These values are derived from the shape of the H I Balmer line profiles from Hβ to Hζ. We flux-calibrated the spectra to facilitate the analysis of the Balmer lines, but the overall shape of the spectrum will retain uncertainties introduced by the flux calibration process as well as the inherent uncertainty in the standard stars used. We emphasize that the spectral shapes are not critical to the ultimate analysis of these DAWDs as spectrophotometric standards. The deviation of the calibrated spectral shape from a model spectrum is treated as a nuisance parameter in the fitting process, so minimizing the calibration error does improve the uncertainties in the end result. Nonetheless, it is the values of T_{e f f} and log g from the Balmer lines in concert with the photometry that provides the ultimate calibration of these stars.

We used two different facilities to obtain spectra of our standard star candidates. As part of the HST photometry proposal, we were awarded Gemini time. This amounted to 43 hours from Cycle 20 (split over Gemini semesters 2013A and 2013B) and 28.1 hours from Cycle 22 (split over Gemini semesters 2015A and 2015B). For most of the time, we used

Gemini South, but we also used Gemini North for the northern targets. At each site, we used the Gemini Multi-Object Spectrograph (GMOS, Hook et al. 2004) in queue mode with a long slit to obtain the spectra. For the 2013A and 2013B semesters, we used the 1.^{′′}5 slit, while for 2015A and 2015B, we used the 1.^{′′}0 slit. The three GMOS detectors are not contiguous, so we used two different grating tilts to fill in the inter-chip gaps. The final spectra are continuous from 3500 Å to 6360 Åwith a dispersion of 0.92 Å/pixel. The resolution of the spectra is a function of the seeing at the time of observation given the relatively wide slit and the generally good seeing conditions at the Gemini sites. Determining the resolution is an element of the data analysis process that will be described in a later paper.

We found that the Gemini data were generally not of sufficiently high quality for our purpose. The throughput of the GMOS system in the blue is poor. In addition, standard stars and other calibrations were frequently not obtained in conjunction with the spectra of the white dwarfs. Finally, despite our request, the observations were typically not obtained at the parallactic angle (Filippenko 1982) so slit losses resulting from atmospheric dispersion resulted in compromised shapes for the spectral energy distributions of the stars. Because of these issues, we instituted a program at the MMT Observatory to obtain alternate spectra of our DAWDs.

At the MMT, we used the Blue Channel spectrograph (Schmidt et al. 1989) with the 300 line/mm grating. We had a total of four successful observing nights spread over three epochs. For most of the observations, we used the 1.^{′′}0 slit, but with the 1.^{′′}25 slit for one epoch. The wavelength coverage runs from 3400Å to 8400Å with a dispersion of 1.95 Å/pixel. All observations were obtained at the parallactic angle and standard stars were observed on the same night. As with the GMOS data, the resolution of the spectra depends on the seeing at the time of observation.

Details of the observations with both facilities are presented in Table 5. We used standard IRAF^8 routines to process the CCD data and optimally extract (Horne 1986) the spectra. The wavelength scale was evaluated via polynomial fits to calibration lamp spectra and then we resampled the WD spectra onto a linear scale with 1Å/pixel and 2Å/pixel for the GMOS and MMT data, respectively. We used our own custom IDL routines to flux calibrate the data (Matheson et al. 2008). Standard stars for each spectrum are listed in Table 5. The spectra of our DAWDs are shown in three figures. Fig. 12 shows the spectra of the three primary CALSPEC standards. Spectra of stars obtained at Gemini are shown in Fig. 13 while those obtained at the MMT are shown in Fig. 14. The details of the determination of T_{e f f} and log g

8 IRAF is distributed by the National Optical Astronomy Observatory, which is operated by AURA under cooperative agreement with the NSF.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 15

Figure 10. Single epoch minus the mean instrumental magnitude measurements for WD0554-165 as a function of observing epoch (black crosses). Averaged and binned relative magnitudes for a set of stable stars of comparable instrumental magnitude in the same field of view are overplotted as a red shaded area. The variability index of the selected stars and the measurement dispersions are listed. Error bars are shown.

Figure 11. Same as Fig. 10 but for star SDSSJ235144.29+375542.6.

16 CALAMIDA ET AL.

Figure 12. Spectra of the three HST primary CALSPEC standards.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 17

will be described in a forthcoming analysis paper (Narayan et al. 2018, in prep.).

One of the WD stars showed indications of abnormality in its spectra. SDSSJ20372.169-051302.964 was observed over several nights with GMOS-S. There is a narrow emission feature present in the cores of the Balmer absorption lines. The emission feature moves relative to the broader line. This may be the result of a low-luminosity companion or some other activity associated with the WD. This star is thus unsuitable for use as a spectrophotometric standard as the model spectra only apply to single, inactive DAWDs.

7. SETTING THE PHOTOMETRIC REFERENCE SYSTEM Photometry for our candidate spectrophotometric standards needs to be placed on a common flux scale at the top of the atmosphere. To achieve this goal we observed the three HST primary CALSPEC WDs and the candidate DAWDs by using the same instrument and telescope set-up in Cycle 22. These observations allowed us to determine the instrumental zero-points (ZPs) for each WFC3 filter, and to tie the magnitudes of all the targets to the same photometric system.

As a first step we calculated fluxes and magnitudes in the AB photometric system for the HST primary CALSPEC WDs by using the HST tool Pysynphot^9. For these simulations, we used the latest model spectra of the three DAWDs provided by the CALSPEC database (mod_010), which are calculated with the Non-Local Thermal-Equilibrium (NLTE) code from Rauch et al. (2013). These models are normalized to an absolute flux level defined by the flux of 3.44×10^{-9} erg cm^{-2} s^{-1} Å^{-1} for Vega at 0.5556μm, as reconciled with the MSX mid-IR absolute flux measures (B14).

The AB magnitude system (Oke 1974) is strictly speaking defined for monochromatic fluxes. If the flux at frequency ν is denoted by f_ν and expressed in units of erg cm^{-2} s^{-1} Hz^{-1}, the corresponding AB magnitude at ν is defined by:

m(AB_ν ) = -2.5log( f_ν ) - 48.60 (3)

This corresponds to a normalization where an object with a flat spectrum has AB magnitude equal to its V band magnitude (Oke & Gunn 1983).

To incorporate the idea of AB magnitudes for nonmonochromatic use, say for a passband X, we use the extension as proposed by Fukugita et al. (1996) for a photon proportional detector system to define the quantity f_X :

f_X = ∫ f_ν v^{-1}Rdν ∫ ν^{-1}Rdν = ∫ N_ν Rdν ∫ (hν)^{-1}Rdν (4)

9 http://pysynphot.readthedocs.io/en/latest/using_pysynphot.html

where R is the (telescope + instrument + filter) response function for passband X, N_ν is the count rate of photons per unit frequency and h is Planck’s constant. The numerator on rightmost side is the photon count rate in the band, so f_X is directly proportional to the photon count rate.

The AB magnitude for passband X is then given by:

m(AB_X ) = -2.5log( f_X ) - 48.60 (5)

A characteristic wavelength, pivot wavelength, is defined to transform flux densities from the frequency to the wavelength domain as:

λ_p = √ c f_ν f_λ = √ ∫ Rλdλ ∫ R^{dλ}_λ (6) which is a source independent quantity. The Space Telescope (ST) magnitude system is defined in the wavelength domain for passband X as:

m(ST_X ) = -2.5log( f_X ) - 21.10 (7)

where ST mag = 0 is 3.63×10^{-9} erg cm^{-2} s^{-1} Å^{-1}. Having defined λ_p, we can then convert AB to ST magnitudes with the relation:

m(ST_λ) = m(AB_ν ) + 5log(λ_p) - 18.70 (8)

We used Pysynphot to calculate synthetic fluxes and magnitudes in the AB photometric system for the primary WDs. As a reference we used the most updated files available on the Space Telescope database^{10}. These reference files give the transmission curves for every element in the optical path of the (HST + WFC3 + filter) system. For a complete list of the reference files please see the linked web-page. The AB fluxes and magnitudes obtained for the three HST primary CALSPEC WDs are listed in Table 6.

The derived AB synthetic magnitudes are compared to the instrumental magnitudes measured from our observations in Cycle 22 for the primary WDs. Fig. 15 shows the difference between synthetic and instrumental magnitudes as a function of the observing epoch for the three stars. Observations were divided in multiple exposures for a total of three visits per star in a time interval of ∼ 1.3 year. We performed a 1.5- σ clipping on the data and we estimated the biweight mean of the difference for the three primary WDs. This difference sets the ZP for our observations. The estimated ZPs with their errors are labeled in each panel of Fig. 15. For observations in the F275W and F336W filters, GD71 measurements (black dots) are consistently offset, i.e. fainter, compared to the other two WDs (cyan stars and magenta triangles). The cause of this difference is not clear. A set of ZPs for each

10 http://www.stsci.edu/hst/observatory/crds/throughput.html

18 CALAMIDA ET AL.

Figure 13. Spectra of the DAWD stars in our program obtained with the GMOS instruments at Gemini. Note that the unusual shapes of some of the spectra are caused by atmospheric dispersion effects and slit losses. Spectra are ordered by Te f f , with the hottest stars at the top.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 19

Figure 14. Spectra of the WD stars in our program obtained with the Blue Channel spectrograph at the MMT. Spectra are ordered by Te f f , with the hottest stars at the top.

20 CALAMIDA ET AL.

Table 1. List of properties of the HST primary CALSPEC standards and the 23 candidate spectrophotometric standard DAWDs.

Star Alt name RA^a DEC^a PM_{RA}^a PM_{DEC}^a SType^a Distance^a T_{e f f}^b log(g)^b

(hh:mm:ss.s) (dd:mm:ss.s) (mas/yr) (mas/yr) (pc) (K)

G191B2B BD+52 913 5:05:30.613 52:49:51.956 12.592±0.122 -93.525±0.106 DA.89 52.9±0.2 57340 7.48 GD71 GD71 5:52:27.614 15:53:13.751 76.841±0.131 -172.944±0.104 DA1.5 51.9±0.2 32780 7.83 GD153 GD153 12:57:02.337 22:01:52.68 -38.410±0.119 -202.953±0.116 DA1.3 68.6±0.3 39390 7.77 SDSSJ010322.19-002047.7 SDSSJ010322.19-002047.7 1:03:22.191 -0:20:47.731 6.216±0.957 -6.313±0.549 DA.67 1097±611 75000 7.81 SDSSJ022817.16-082716.4 WD0225-086 2:28:17.169 -8:27:16.409 12.241±1.461 3.827±1.000 DA2.45 525±181 20555 7.87 SDSSJ024854.96+334548.3 SDSSJ024854.96+334548.3 2:48:54.967 33:45:48.33 3.635±0.700 -4.718±0.442 DA1.46 630±128 34497 7.30 SDSSJ041053.632-063027.580 WD0408-066 4:10:53.634 -6:30:27.749 8.620±0.411 9.700±0.237 DA.77 1833±1248 65796 7.52 WD0554-165 WD0554-165 5:57:01.296 -16:35:12.12 -7.188±0.399 4.781±0.623 Č. 239±13 . . . . . . SDSSJ072752.76+321416.1 SDSSJ072752.76+321416.1 7:27:52.76 32:14:16.141 -13.095±0.366 -7.094±0.373 DA.88 990±198 57865 7.61 SDSSJ081508.78+073145.7 SDSSJ081508.78+073145.7 8:15:08.779 7:31:45.804 3.135±1.384 0.313±0.794 DA1.55 . . . 32387 6.81 SDSSJ102430.93-003207.0 SDSSJ102430.93-003207.0 10:24:30.932 0:32:07.03 -24.0 -5.0 DA1.21 . . . 41584 7.77 SDSSJ111059.42-170954.2 SDSSJ111059.42-170954.2 11:10:59.428 -17:09:54.27 5.045±0.418 -7.763±0.293 DA.96 1333±359 52555 7.73 SDSSJ111127.30+395628.0 SDSSJ111127.30+395628.0 11:11:27.309 39:56:28.079 3.277±0.445 3.095±0.598 DA.75 648±166 67380 7.80 SDSSJ120650.504+020143.810 WD1204+023 12:06:50.408 2:01:42.46 -4.594±0.663 -23.143±0.319 DA2.02 590±130 24926 7.98 SDSSJ121405.11+453818.5 CSO1291 12:14:05.112 45:38:18.56 0.291±0.140 13.803±0.170 DA1.43 495±31 35245 7.91 SDSSJ130234.43+101238.9 SDSSJ130234.43+101238.9 13:02:34.441 10:12:39.01 -12.523±0.252 -17.372±0.191 DA1.20 389±17 42070 7.91 SDSSJ131445.050-031415.588 WD1312-029 13:14:45.05 -3:14:15.641 -4.102±1.190 -6.354±0.606 DA1.05 1154±834 47818 7.76 SDSSJ151421.27+004752.8 LB 769 15:14:21.28 0:47:52.883 4.400±0.175 -27.041±0.222 DA1.74 157±3 28999 7.81 SDSSJ155745.40+554609.7 WD1556+559 15:57:45.404 55:46:09.75 -11.545±0.260 -21.340±0.204 DA.79 688±52. 64122 7.65 SDSSJ163800.360+004717.822 WD1635+008 16:38:00.366 0:47:17.801 -9.582±0.782 -2.797±0.467 DA.77 876±283 65116 7.37 SDSSJ172135.97+294016.0 SDSSJ172135.97+294016.0 17:21:35.981 29:40:15.996 -21.454±0.564 10.452±0.638 DA5.44 271±26 9261 8.33 SDSSJ181424.075+785403.048 WD1817+788 18:14:24.122 78:54:02.909 -11.041±0.103 11.292±0.132 DA1.6 257±3 31500 7.81 SDSSJ20372.169-051302.964 WD 2034-053 20:37:22.167 -5:13:03.029 3.106±0.647 -2.723±0.389 DA1.33 912±324 37923 7.92 SDSSJ210150.65-054550.9 WD2059-059 21:01:50.657 -5:45:50.969 10.828±0.456 -11.727±0.372 DA1.75 662±107 28816 7.78 SDSSJ232941.330+001107.755 WD2327-000 23:29:41.325 0:11:07.8 -8.299±0.384 -14.421±0.277 DA2.37 318±25 21266 7.88 SDSSJ235144.29+375542.6 SDSSJ235144.29+375542.6 23:51:44.293 37:55:42.661 -16.575±0.294 -10.048±0.185 DA.95 765±134 53333 7.72

a Coordinates, proper motions, spectral type and distance measurements are from GAIA DR2.

b Effective temperature and surface gravity measurements are from the SDSS or the Villanova catalogs.

of the photometric reduction method was estimated and they are all listed in Table 7.

As a sanity check we also derived ZPs for the same filters but for an aperture radius of 10 pixels for WFC3-UVIS, and to infinity for WFC3-UVIS and WFC3-IR, i.e. the aperture radii used by the WFC3 team to provide the official ZPs. To derive ZPs to infinity we used the encircled energy (EE) correction tables provided by the WFC3 database^{11}.

Fig. 16 shows the comparison between WFC3 official ZPs and ZPs measured using our observations, reduced with DAOPHOT, for the three CALSPEC standards as a function of wavelength. Error bars show uncertainties in our ZP estimates, since there are no errors provided for the WFC3 ZPs. The left panel shows the comparison for ZPs derived for an aperture radius of 10 pixels (F160W is excluded since ZPs for WFC3-IR are not provided for this aperture), while the right panel shows the same comparison for all filters and for an infinite aperture radius. The two sets of ZPs agree very

11 http://www.stsci.edu/hst/wfc3/analysis/ir_ee; http://www.stsci.edu/hst/wfc3/analysis/uvis_ee

well, with only the F275W and the F160W filters being ≳1% off. WFC3 official ZPs are calculated by using a set of observations taken in between 2009 and 2015, and the epoch to which these sensitivities are normalized is then ≈ 2012.5, and they are an average of measurements collected on the UVIS2 amplifiers C and D. The WFC3 inverse sensitivities change with time and our ZPs are provided for the average epoch of the observations, i.e. ≈ 2015.5, and are based on data collected only on amplifier C. The change in sensitivity of the (detector+filter) system will be analyzed in Section 7.1. In spite of the aforementioned issues, the overall average difference between the two sets of ZP is 0.003 mag with a dispersion of 0.005 mag for a 10 pixel aperture, and 0.002 mag with a dispersion of 0.006 mag for the infinite aperture. ZPs for a 10 pixel aperture radius and for infinity are listed in Table 8. These ZPs can be used by any astronomer performing observations by using WFC3-UVIS2 and WFC3-IR and to tie their photometry to the HST photometric scale.

7.1. Tracking WFC3 sensitivity variation with time We used observations of the three HST primary CALSPEC standards to track the variation of WFC3 sensitivity as a func-

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 21

Figure 15. ZPs in the AB photometric system based on all the observations for the three HST primary CALSPEC WDs (GD71 = black dots, GD153 = cyan stars, and G191B2B = magenta triangles) as a function of the Heliocentric Julian date (HJD) for six WFC3-UVIS and WFC3-IR filters as measured with DAOPHOT. Error bars are shown and the derived ZPs are labeled.

22 CALAMIDA ET AL.

Table 2. Pan-STARRS1 photometry for the candidate spectrophotometric standard DA white dwarfs.

Star RA DEC g err_g r err_r i err_i z err_z

(hh:mm:ss.s) (dd:mm:ss.s) (mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag)

G191B2B 5:05:30.613 52:49:51.956 . . . . . . . . . . . . . . . . . . . . . . . . GD71 5:52:27.614 15:53:13.751 12.846 0.003 13.284 0.001 13.629 0.005 13.921 0.003 GD153 12:57:02.337 22:01:52.68 13.115 0.004 13.586 0.001 13.968 0.006 14.257 0.002 SDSSJ010322.19-002047.7 1:03:22.191 -0:20:47.731 19.093 0.010 19.570 0.019 19.979 0.017 20.130 0.064 SDSSJ022817.16-082716.4 2:28:17.169 -8:27:16.409 19.837 0.014 20.188 0.053 20.523 0.036 20.803 0.117 SDSSJ024854.96+334548.3 2:48:54.967 33:45:48.33 18.351 0.007 18.699 0.006 18.972 0.012 19.198 0.031 SDSSJ041053.632-063027.580 4:10:53.634 -6:30:27.749 18.871 0.008 19.224 0.010 19.429 0.022 19.342 0.028 WD0554-165 5:57:01.296 -16:35:12.12 17.787 0.012 18.237 0.012 18.628 0.010 18.916 0.010 SDSSJ072752.76+321416.1 7:27:52.76 32:14:16.141 18.018 0.010 18.475 0.011 18.806 0.012 19.127 0.024 SDSSJ081508.78+073145.7 8:15:08.779 7:31:45.804 19.781 0.040 20.328 0.037 20.625 0.073 20.710 0.165 SDSSJ102430.93-003207.0 10:24:30.932 0:32:07.03 18.885 0.009 19.292 0.023 19.440 0.098 19.758 0.031 SDSSJ111059.42-170954.2 11:10:59.428 -17:09:54.27 17.895 0.005 18.302 0.009 18.607 0.015 18.957 0.026 SDSSJ111127.30+395628.0 11:11:27.309 39:56:28.079 18.412 0.015 18.886 0.011 19.260 0.011 19.586 0.016 SDSSJ120650.504+020143.810 12:06:50.408 2:01:42.46 18.693 0.010 19.096 0.029 19.388 0.024 19.645 0.034 SDSSJ121405.11+453818.5 12:14:05.112 45:38:18.56 17.779 0.005 18.236 0.007 18.570 0.010 18.849 0.017 SDSSJ130234.43+101238.9 13:02:34.441 10:12:39.01 17.052 0.003 17.494 0.003 17.858 0.006 18.114 0.009 SDSSJ131445.050-031415.588 13:14:45.05 -3:14:15.641 19.078 0.014 19.556 0.021 19.887 0.040 20.240 0.069 SDSSJ151421.27+004752.8 15:14:21.28 0:47:52.883 15.720 0.002 16.101 0.004 16.434 0.002 16.715 0.005 SDSSJ155745.40+554609.7 15:57:45.404 55:46:09.75 17.487 0.005 17.958 0.007 18.356 0.005 18.647 0.011 SDSSJ163800.360+004717.822 16:38:00.366 0:47:17.801 18.860 0.013 19.314 0.022 19.611 0.013 19.816 0.053 SDSSJ172135.97+294016.0 17:21:35.981 29:40:15.996 19.637 0.015 19.636 0.015 19.754 0.024 19.995 0.101 SDSSJ181424.075+785403.048 18:14:24.122 78:54:02.909 16.573 0.005 17.007 0.003 17.358 0.004 17.651 0.009 SDSSJ20372.169-051302.964 20:37:22.167 -5:13:03.029 18.987 0.009 19.349 0.010 19.576 0.020 19.881 0.047 SDSSJ210150.65-054550.9 21:01:50.657 -5:45:50.969 18.652 0.009 19.052 0.008 19.410 0.018 19.703 0.033 SDSSJ232941.330+001107.755 23:29:41.325 0:11:07.8 18.134 0.006 18.452 0.005 18.772 0.008 19.003 0.017 SDSSJ235144.29+375542.6 23:51:44.293 37:55:42.661 18.085 0.004 18.447 0.013 18.776 0.010 19.100 0.036

Figure 16. Comparison between ZPs in the AB photometric system measured from our observations of the three HST primary CALSPEC WDs and the WFC3 official ZPs as a function of wavelength. ZPs are derived for an aperture radius of 10 pixels (left panel, UVIS) and infinity (right, UVIS + IR). See text for more details.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 23

Table 3. GAIA DR2 photometry for the candidate spectrophotometric standard DA white dwarfs.

Star RA DEC G err_G Rp err_{Rp} Bp err_{Bp}

(hh:mm:ss.s) (dd:mm:ss.s) mag mag mag mag mag mag

G191B2B 5:05:30.613 52:49:51.956 11.738 0.001 12.067 0.002 11.487 0.015 GD71 5:52:27.614 15:53:13.751 13.026 0.002 13.299 0.002 12.77 0.012 GD153 12:57:02.337 22:01:52.68 13.322 0.0 13.629 0.001 13.081 0.005 SDSSJ010322.19-002047.7 1:03:22.191 -0:20:47.731 19.356 0.004 19.577 0.072 19.154 0.03 SDSSJ022817.16-082716.4 2:28:17.169 -8:27:16.409 20.046 0.01 20.192 0.141 19.869 0.139 SDSSJ024854.96+334548.3 2:48:54.967 33:45:48.33 18.561 0.003 18.704 0.031 18.333 0.047 SDSSJ041053.632-063027.580 4:10:53.634 -6:30:27.749 19.024 0.002 19.013 0.023 18.861 0.025 WD0554-165 5:57:01.296 -16:35:12.12 17.98 0.003 18.306 0.03 17.726 0.022 SDSSJ072752.76+321416.1 7:27:52.76 32:14:16.141 18.232 0.003 18.458 0.036 17.944 0.007 SDSSJ081508.78+073145.7 8:15:08.779 7:31:45.804 19.996 0.005 20.278 0.166 19.695 0.044 SDSSJ102430.93-003207.0 10:24:30.932 0:32:07.03 19.12 0.005 19.297 0.105 18.94 0.059 SDSSJ111059.42-170954.2 11:10:59.428 -17:09:54.27 18.089 0.002 18.347 0.02 17.852 0.011 SDSSJ111127.30+395628.0 11:11:27.309 39:56:28.079 18.69 0.003 18.955 0.075 18.365 0.022 SDSSJ120650.504+020143.810 12:06:50.408 2:01:42.46 18.885 0.002 18.957 0.03 18.651 0.017 SDSSJ121405.11+453818.5 12:14:05.112 45:38:18.56 18.002 0.001 18.154 0.038 17.757 0.011 SDSSJ130234.43+101238.9 13:02:34.441 10:12:39.01 17.268 0.001 17.527 0.012 17.044 0.006 SDSSJ131445.050-031415.588 13:14:45.05 -3:14:15.641 19.354 0.004 19.631 0.082 19.082 0.042 SDSSJ151421.27+004752.8 15:14:21.28 0:47:52.883 15.905 0.001 16.119 0.005 15.743 0.009 SDSSJ155745.40+554609.7 15:57:45.404 55:46:09.75 17.721 0.002 18.019 0.018 17.452 0.014 SDSSJ163800.360+004717.822 16:38:00.366 0:47:17.801 19.065 0.002 19.313 0.04 18.853 0.019 SDSSJ172135.97+294016.0 17:21:35.981 29:40:15.996 19.648 0.005 19.528 0.037 19.733 0.042 SDSSJ181424.075+785403.048 18:14:24.122 78:54:02.909 16.773 0.002 17.031 0.007 16.57 0.009 SDSSJ20372.169-051302.964 20:37:22.167 -5:13:03.029 19.148 0.003 19.375 0.055 18.982 0.018 SDSSJ210150.65-054550.9 21:01:50.657 -5:45:50.969 18.867 0.002 19.095 0.044 18.654 0.021 SDSSJ232941.330+001107.755 23:29:41.325 0:11:07.8 18.323 0.002 18.394 0.028 18.187 0.021 SDSSJ235144.29+375542.6 23:51:44.293 37:55:42.661 18.272 0.002 18.417 0.014 18.056 0.016

Table 4. Log of the observations collected with the Wide Field Camera 3 on board the Hubble Space Telescope during cycles 20 and 22 (proposal IDs 12967 and 13711, PI: A. Saha).

Star PID^a Image name RA DEC Filter Exposure time Date Obs. Time Obs. Aperture

(hh:mm:ss.s) (dd:mm:ss.s) (s) (YYYY/MM/DD) (UT)

Cycle 20 SDSSJ010322.19-002047.7 12967 ibyn01wxq 01:03:22.1 00:20:47.7 F336W 160 2013-09-13 21:46:26 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01x0q 01:03:22.1 00:20:47.7 F336W 160 2013-09-13 21:51:25 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01x2q 01:03:22.1 00:20:47.7 F336W 160 2013-09-13 23:17:30 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01woq 01:03:22.1 00:20:47.7 F475W 120 2013-09-14 20:13:32 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01xjq 01:03:22.1 00:20:47.7 F475W 160 2013-09-14 01:08:35 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01xmq 01:03:22.1 00:20:47.7 F475W 160 2013-09-14 01:13:33 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01wtq 01:03:22.1 00:20:47.7 F625W 350 2013-09-13 20:30:47 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01x8q 01:03:22.1 00:20:47.7 F625W 355 2013-09-13 23:36:41 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01wqq 01:03:22.1 00:20:47.7 F775W 605 2013-09-13 20:18:08 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01x5q 01:03:22.1 00:20:47.7 F775W 680 2013-09-13 23:22:47 UVIS1-FIX SDSSJ010322.19-002047.7 12967 ibyn01wvq 01:03:22.1 00:20:47.7 F160W 499 2013-09-14 21:36:26 IR-FIX SDSSJ010322.19-002047.7 12967 ibyn01xhq 01:03:22.1 00:20:47.7 F160W 499 2013-09-14 00:58:35 IR-FIX SDSSJ041053.632-063027.580 12967 ibyn02lhq 04:10:53.6 -06:30:27.7 F336W 160 2013-08-27 22:02:46 UVIS1-FIX

a Program ID

NOTE—Table 4 is published in its entirety in the machine readable format. A portion is shown here for guidance regarding its form and content.

24 CALAMIDA ET AL.

Table 5. Log of the spectroscopic observations.

Star UT Date Tel.^a Range Res.^b P.A.^c Airmass Flux Std.^d Slit Exposure

(Å) (Å) (^∘) (^{′′} ) (s)

G191B2B 2015-01-24 MMTO 3400-8400 8 -111.8 1.2 Feige34 1.0 8 GD153 2015-05-18 MMTO 3400-8400 8 -52.9 1.0 BD+284211 1.0 15 GD71 2015-01-24 MMTO 3400-8400 8 12.8 1.0 Feige34 1.0 10 SDSSJ010322.19-002047.7 2013-11-29 GEMINI-S 3500-6360 10 180.0 1.2 GD71 1.5 6x1500 SDSSJ010322.19-002047.7 2015-10-11 MMTO 3400-8400 8 13.5 1.2 BD+284211 1.25 2x1200 SDSSJ022817.16-082716.4 2013-10-23^X GEMINI-S 3500-6360 10 0.0 1.2 GD71 1.5 7x1500 SDSSJ024854.96+334548.3 2015-10-08^X GEMINI-N 3520-6360 7 232.0 1.1 BD+284211/G191B2B 1.0 8x999 SDSSJ024854.96+334548.3 2015-10-11.5 MMTO 3400-8400 8 92.4 1.1 BD+284211 1.25 5x1200 SDSSJ041053.632-063027.580 2013-12-04^X GEMINI-S 3500-6360 10 180.0 1.2 GD71 1.5 6x1500 SDSSJ041053.632-063027.580 2015-01-24 MMTO 3400-8400 8 12.8 1.3 Feige34 1.0 3x900 WD0554-165 2015-01-24 MMTO 3400-8400 8 12.8 1.5 Feige34 1.0 3x900 SDSSJ072752.76+321416.1 2015-01-24 MMTO 3400-8400 8 -93.5 1.0 Feige34 1.0 3x900 SDSSJ081508.78+073145.7 2013-07-07^X GEMINI-S 3500-6360 12 0.0 1.3 GD71/Feige110 1.5 6x1500 SDSSJ081508.78+073145.7 2015-01-24 MMTO 3400-8400 8 9.3 1.1 Feige34 1.0 4x900 SDSSJ102430.93-003207.0 2013-02-15 GEMINI-S 3500-6360 12 0.0 1.3 Feige110 1.5 6x1500 SDSSJ111059.43-170954.1 2015-01-24 MMTO 3400-8400 8 -5.2 1.5 Feige34 1.0 3x900 SDSSJ111059.43-170954.1 2015-05-18 GEMINI-S 3500-6500 8 0.0 1.2 Feige67 1.0 8x700 SDSSJ111127.30+395628.0 2015-01-24 MMTO 3400-8400 8 -111.6 1.0 Feige34 1.0 3x900 SDSSJ111127.30+395628.0 2015-05-18 MMTO 3400-8400 8 130.0 1.0 BD+284211 1.0 2x900 SDSSJ120650.504+020143.810 2013-03-10 GEMINI-S 3500-6360 10 35.0 1.2 Feige110 1.5 6x1500 SDSSJ121405.11+453818.5 2015-02-18 GEMINI-N 3520-6360 8 130.0 1.2 Feige34 1.0 6x899 SDSSJ121405.11+453818.5 2015-05-18 MMTO 3400-8400 8 1000.0 1.0 BD+284211 1.0 3x900 SDSSJ130234.43+101238.9 2013-02-15^X GEMINI-S 3500-6360 10 138.0 1.4 Feige110 1.5 8x1200 SDSSJ131445.050-031415.588 2013-03-09 GEMINI-S 3500-6360 10 340.0 1.1 Feige110 1.5 6x1500 SDSSJ131445.050-031415.588 2015-01-24 MMTO 3400-8400 8 -22.4 1.3 Feige34 1.0 4x900 SDSSJ131445.050-031415.588 2015-05-18 MMTO 3400-8400 8 6.4 1.2 BD+284211 1.0 2x900 SDSSJ151421.27+004752.8 2013-03-10^X GEMINI-S 3500-6360 10 0.0 1.3 Feige110 1.5 8x1200 SDSSJ155745.40+554609.7 2015-01-24 MMTO 3400-8400 8 -113.9 1.2 Feige34 1.0 2x900 SDSSJ155745.40+554609.7 2015-05-18 MMTO 3400-8400 8 -129.8 1.1 BD+284211 1.0 4x900 SDSSJ163800.360+004717.822 2013-04-08 GEMINI-S 3500-6360 10 0.0 1.3 Feige110 1.5 6x1500 SDSSJ163800.360+004717.822 2015-05-18 MMTO 3400-8400 8 22.0 1.2 BD+284211 1.0 4x900 SDSSJ172135.97+294016.0 2013-06-04 GEMINI-S 3500-6360 10 180.0 2.1 Feige110 1.5 6x1500 SDSSJ172135.97+294016.0 2015-05-18 MMTO 3400-8400 8 -77.6 1.1 BD+284211 1.0 4x900 SDSSJ181424.13+785402.9 2015-04-27 GEMINI-N 3520-6360 8 0.0 2.0 Feige34 1.0 6x699 SDSSJ181424.13+785402.9 2015-05-18 MMTO 3400-8400 8 -152.3 1.5 BD+284211 1.0 3x900 SDSSJ20372.169-051302.964 2014-07-14^X GEMINI-S 3400-6500 10 0.0 1.1 Feige110 1.5 8x1500 SDSSJ20372.169-051302.964 2015-10-12 MMTO 3400-8400 8 -8.4 1.3 BD+284211 1.25 3x1200 SDSSJ210150.65-054550.9 2014-07-20 GEMINI-S 3400-6500 10 0.0 1.2 Feige110 1.5 6x1300 SDSSJ210150.65-054550.9 2015-05-18 MMTO 3400-8400 8 -39.9 1.5 BD+284211 1.0 2x900 SDSSJ210150.65-054550.9 2015-10-11 MMTO 3400-8400 8 1.7 1.3 BD+284211 1.25 6x1200 SDSSJ232941.330+001107.755 2015-10-01^X GEMINI-N 3520-6360 8 12.0 1.2 BD+284211 1.0 11x1099 SDSSJ232941.330+001107.755 2015-10-11 MMTO 3400-8400 8 -14.2 1.2 BD+284211 1.25 6x1200 SDSSJ235144.29+355542.6 2015-05-18 MMTO 3400-8400 8 -74.2 1.7 BD+284211 1.0 900+765 SDSSJ235144.29+355542.6 2015-09-15 GEMINI-N 3520-6360 8 180.0 1.2 BD+284211 1.0 6x999 SDSSJ235144.29+355542.6 2015-10-11 MMTO 3400-8400 8 126.4 1.0 BD+284211 1.25 5x1200

a Telescope used to obtain given spectrum. GEMINI-N and GEMINI-S denote the use of GMOS at either the northern or southern site for the Gemini Observatory.

MMTO denotes the use of the Blue Channel spectrograph at the MMT Observatory.

b Resolution of the spectrum as determined from the full-width at half maximum of sky lines present in the two-dimensional spectrum. This is, in general, an upper limit as the resolution for the stellar spectrum is determined by the seeing and the slit width. In many cases, especially with the wider slits used with GMOS, the resolution of the spectrum is better than this reported value.

c The position angle of the observations. Spectra from the MMT were typically observed at the parallactic angle, while the Gemini data were not.

d Flux standards used to calibrate the data: Feige 34, BD+28∘4211, Feige 110, —(Stone 1977; Massey et al. 1988; Massey & Gronwall 1990); GD71— (Bohlin et al. 1995); G191B2B—(Oke 1974; Massey et al. 1988).

e Spectra from Gemini were obtained in queue mode and thus could be observed over multiple nights. The UT date reported for these stars is represents an average of the actual dates. Note that observations for SDSSJ081508 were separated by 10 months.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 25

Table 6. Synthetic magnitudes and fluxes in the AB and ST photometric system for the three HST primary CALSPEC DAWDs as simulated by using Pysynphot. The pivot wavelength for each filter is also listed. See text for more details.

Filter λ_p AB mag F_ν ST mag F_λ

Å (mag) (erg cm^{-2} s^{-1} Hz^{-1}) (mag) (erg cm^{-2} s^{-1} Hz^{-1})

GD153 F275W 2,703 12.200 4.78e-25 10.669 1.96e-13 F336W 3,354 12.566 3.41e-25 11.503 9.09e-14 F475W 4,770 13.098 2.09e-25 12.799 2.76e-14 F625W 6,240 13.598 1.32e-25 13.882 1.02e-14 F775W 7,651 14.004 9.09e-26 14.730 4.66e-15 F160W 15,369 15.414 2.48e-26 17.654 3.15e-16 GD71 F275W 2,703 11.981 5.85e-25 10.450 2.40e-13 F336W 3,354 12.327 4.26e-25 11.264 1.13e-13 F475W 4,770 12.794 2.77e-25 12.496 3.64e-14 F625W 6,240 13.275 1.78e-25 13.558 1.37e-14 F775W 7,651 13.672 1.23e-25 14.398 6.32e-15 F160W 15,369 15.060 3.43e-26 17.301 4.36e-16 G191B2B F275W 2,703 10.492 2.30e-24 8.960 9.46e-13 F336W 3,354 10.892 1.60e-24 9.829 4.25e-13 F475W 4,770 11.500 9.12e-25 11.201 1.20e-13 F625W 6,240 12.030 5.60e-25 12.314 4.31e-14 F775W 7,651 12.449 3.81e-25 13.175 1.95e-14 F160W 15,369 13.885 1.01e-25 16.125 1.29e-15

tion of filter and time. The observations of the CALSPEC stars span a time interval of approximately 1.3 year, from the fall of 2014 to the beginning of 2016. Instrumental count rates for aperture radii 7.5 (WFC3-UVIS) and 5 (WFC3-IR) pixels in the AB photometric system were derived for the CALSPEC WDs in the six filters for the three different visits, each one with a number of observations ranging from 6 to 8, depending on the filter, as described in section 3. Synthetic count rates were derived with Pysynphot for the same stars as observed with WFC3. We followed the same procedure described in section 7 and we simulated count rates for aperture radii of 7.5 (WFC3-UVIS) and 5 (WFC3-IR) pixels, i.e. the radii we used to perform photometry on the real images.

Fig. 17 shows the ratio of the observed to synthetic count rates as a function of the observing epoch for the three primary WDs (GD71 = black dots, GD153 = cyan stars, and G191B2B = magenta triangles) and the six filters, after we performed a 1.5-σ clipping of the data. The plot shows that the sensitivity is decreasing with time for all filters: the decrease is steeper for the bluer filters, F275W, F336W, and F475W, and shallower for the redder, F625W, F775W, and F160W. We performed a linear least-square fit and obtained slopes ranging from -0.03 to -0.27, with the larger slopes for F336W and F475W and the smaller for F625W and F160W.

The fit to the data and the final sensitivity decrease rate per year are shown in Fig. 17.

The sensitivity loss rates we obtained from our observations are in good agreement, within uncertainties, with the rates provided by the WFC3 photometric contamination monitor studies. One of the contamination monitor program is based on about 8 years of observations of the CALSPEC WD GWR70. These data show that WFC3 sensitivity decreases by less than 0.01% for the ultraviolet filters F275W and F336W (see Table reftable:4 of Shanahan et al. 2017 for more details). However, no measurements are available for the F475W, F625W and F775W filters from this contamination monitor. It is worth mentioning that UV filters had an increase in sensitivity soon after WFC3 was installed and then started to decrease (see Fig. 8 in Shanahan et al. 2017). The very low percentage decrease obtained by Shanahan et al. (2017) for the UV filters is due to fitting all the measurements for GWR70 at the same time. A more recent contamination monitor study from the WFC3 team based on 8 years of photometry for the three primary WDs and the CALSPEC Gtype standard P330E, obtained steeper slopes for the UV filters, by only considering measurements from when the sensitivity started to decrease. The new sensitivity loss rates range from ∼ -0.05 to -0.2% per year for the UVIS filters F275W, F336W, F475W, F625W and F775W (private communication). These results will be soon published in a WFC3 ISR.

The WFC3 sensitivity loss rates that we derived by using our observations of the primary WDs have very large errors, 0.1-0.2%. Our data cover indeed a very short time interval of a little more than 1 year and are insufficient to fully characterize the sensitivity variations with time. On the other hand, the total dispersion of the measurements for the three primary WDs is always less than ∼ 0.005 mag in all UVIS filters and less then 1% for in the infrared in the considered time interval of our program observations. Therefore, we did not apply any time correction to the photometry.

7.2. The final magnitudes The ZPs obtained in section 7 were applied to the weighted mean instrumental magnitudes of all the 23 candidate standard DAWDs. The ZPs were derived by using observations of the three HST primary CALSPEC standards performed under the same conditions and reduced with the same technique and take into account any possible systematics in the observations and data reduction process. For each of the three different reduction methods, final calibrated magnitudes for filter X in the AB photometric system are derived as:

m(AB_X )_{cal} = m(AB_X )_{inst} +ZP_{ABX} = (-2.5log( f_X )-48.60)+ZP_{ABX} (9)

26 CALAMIDA ET AL.

Figure 17. Ratio of observed to synthetic count rates for the three HST primary CALSPEC standards (GD71 = black dots, GD153 = cyan stars, and G191B2B = magenta triangles) as a function of the Heliocentric Julian date (HJD) for six WFC3-UVIS and WFC3-IR filters. Error bars and the slope fits are shown. The rate of yearly sensitivity loss is labeled.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 27

Table 7. Zero points and their uncertainties for WFC3-UVIS (aperture radius r = 7.5 pixels) and IR (r = 5 pixels) observations in the AB photometric system. Zero points are derived by using observations of the three HST primary CALSPEC standards as measured with three different methods.

Filter ZP (DAOPHOT) eZP (DAOPHOT) ZP (ILAPH) eZP (ILAPH) ZP (Sextractor) eZP (Sextractor)

(mag) (mag) (mag) (mag) (mag) (mag)

F275W 24.0612 0.0008 24.0596 0.0009 24.0594 0.0009 F336W 24.5910 0.0008 24.5899 0.0008 24.5889 0.0010 F475W 25.5780 0.0007 25.5774 0.0009 25.5761 0.0007 F625W 25.4073 0.0005 25.4056 0.0007 25.4043 0.0005 F775W 24.7207 0.0006 24.7189 0.0008 24.7171 0.0006 F160W 25.8092 0.0007 25.8116 0.0009 25.8106 0.0007

28 CALAMIDA ET AL.

Table 8. Zero points and their uncertainties for 10 pixel aperture radius (WFC3-UVIS) and infinity (WFC3-UVIS, WFC3-IR) in the AB photometric system. Zero points are derived by using our observations of the three HST primary CALSPEC standards as measured with DAOPHOT (first columns) and the official WFC3 values are in the last two columns^a .

Filter ZP_{10} eZP_{10} ZP_{in f} eZP_{in f} ZP_{10}(WFC3) ZP_{in f} (WFC3)

(mag) (mag) (mag) (mag) (mag) (mag)

F275W 24.0853 0.0007 24.2293 0.0008 24.075 24.224 F336W 24.6131 0.0008 24.7344 0.0008 24.608 24.734 F475W 25.6034 0.0006 25.7057 0.0007 25.604 25.709 F625W 25.4310 0.0005 25.5334 0.0005 25.427 25.532 F775W 24.7522 0.0005 24.8571 0.0006 24.753 24.859 F160W . . . . . . 25.9580 0.0007 . . . 25.946

a Current WFC3 UVIS and IR official ZPs can be found at http://www.stsci.edu/hst/wfc3/phot_zp_lbn

where f_X is in electrons/s, for aperture radii of 7.5 (WFC3- UVIS) and 5 pixels (WFC3-IR), respectively, and ZP_{ABX} are the estimated ZPs listes in Table 7.

The final magnitudes for the 23 candidate spectrophotometric standard DAWDs and the HST primary CAL- SPEC WDs are listed in Table 9. Fig. 3 shows the Bp - Rp, F475W - F775W color-color diagram for the 23 candidate spectrophotometric standard DAWDs where GAIA and WFC3 magnitudes derived with DAOPHOT are plotted.

Regardless of the photometric reduction method used, magnitudes for our DAWDs have an average dispersion ranging from 1 to 3 milli-mag for the WFC3-UVIS filters and from 5 to 10 milli-mag for the F160W IR filter.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 29

Table 9. Photometry in the WFC3 UVIS and IR filters for the 3 HST primary CALSPEC standards and the 23 candidate standard DAWDs in the AB photometric system. Photometry performed with three different software packages, DAOPHOT, Source Extractor and ILAPH and the applied magnitude offsets between HST Cycle 20 and Cycle 22, derived from Fig. 9, are listed. See text for more details.

Star F275W dF275W F336W dF336W F475W dF475W F625W dF625W F775W dF775W F160W dF160W

(mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag) DAOPHOT Offsets . . . . . . -0.033 0.001 -0.007 0.005 -0.006 0.004 0.013 0.006 -0.014 0.004 G191B2B 10.488 0.002 10.888 0.001 11.498 0.001 12.030 0.001 12.451 0.001 13.883 0.002 GD71 11.986 0.002 12.333 0.001 12.796 0.001 13.277 0.001 13.672 0.001 15.065 0.002 GD153 12.199 0.002 12.565 0.001 13.099 0.002 13.597 0.001 14.002 0.001 15.413 0.002 SDSSJ010322.19-002047.7 18.191 0.004 18.524 0.006 19.082 0.005 19.562 0.005 19.967 0.005 21.364 0.020 SDSSJ022817.16-082716.4 19.512 0.006 19.732 0.037 19.811 0.005 20.178 0.006 20.506 0.007 21.737 0.015 SDSSJ024854.96+334548.3 17.829 0.004 18.042 0.004 18.367 0.003 18.745 0.002 19.078 0.002 20.341 0.006 SDSSJ041053.632-063027.580 18.110 0.009 18.401 0.004 18.879 0.004 19.254 0.003 19.387 0.007 19.500 0.005 WD0554-165 16.774 0.005 17.150 0.003 17.720 0.005 18.221 0.002 18.622 0.007 20.046 0.002 SDSSJ072752.76+321416.1 17.158 0.003 17.467 0.003 17.990 0.003 18.456 0.002 18.839 0.002 20.214 0.006 SDSSJ081508.78+073145.7 18.939 0.005 19.262 0.006 19.713 0.004 20.186 0.004 20.578 0.005 21.967 0.015 SDSSJ102430.93-003207.0 18.248 0.038 18.509 0.004 18.903 0.004 19.314 0.005 19.667 0.009 20.989 0.014 SDSSJ111059.42-170954.2 17.039 0.004 17.351 0.004 17.864 0.002 18.313 0.002 18.690 0.002 20.057 0.005 SDSSJ111127.30+395628.0 17.432 0.004 17.832 0.005 18.419 0.003 18.940 0.004 19.344 0.002 20.795 0.010 SDSSJ120650.504+020143.810 18.236 0.004 18.484 0.004 18.669 0.004 19.058 0.004 19.411 0.005 20.700 0.011 SDSSJ121405.11+453818.5 16.938 0.002 17.279 0.002 17.758 0.002 18.231 0.002 18.630 0.002 20.035 0.004 SDSSJ130234.43+101238.9 16.185 0.002 16.519 0.002 17.033 0.002 17.512 0.002 17.904 0.001 19.302 0.004 SDSSJ131445.050-031415.588 18.254 0.004 18.593 0.004 19.100 0.004 19.571 0.004 19.933 0.010 21.329 0.012 SDSSJ151421.27+004752.8 15.108 0.002 15.387 0.002 15.707 0.002 16.119 0.001 16.470 0.001 17.783 0.004 SDSSJ155745.40+554609.7 16.496 0.002 16.873 0.002 17.468 0.003 17.990 0.002 18.389 0.002 19.832 0.005 SDSSJ163800.360+004717.822 18.012 0.007 18.314 0.004 18.838 0.004 19.283 0.003 19.664 0.005 20.999 0.015 SDSSJ172135.97+294016.0 20.370 0.010 20.086 0.014 19.654 0.004 19.670 0.003 19.769 0.003 20.554 0.022 SDSSJ181424.075+785403.048 15.788 0.002 16.119 0.002 16.542 0.002 17.004 0.002 17.392 0.001 18.782 0.002 SDSSJ203722.169-051302.964 18.254 0.007 18.540 0.004 18.940 0.006 19.371 0.007 19.674 0.008 20.965 0.009 SDSSJ210150.65-054550.9 18.064 0.003 18.328 0.004 18.654 0.003 19.062 0.002 19.419 0.003 20.737 0.006 SDSSJ232941.330+001107.755 17.940 0.003 18.105 0.004 18.158 0.005 18.472 0.003 18.785 0.006 19.997 0.007 SDSSJ235144.29+375542.6 17.446 0.003 17.658 0.002 18.073 0.002 18.459 0.002 18.788 0.002 20.070 0.004 SExtractor Offsets . . . . . . -0.031 0.003 -0.004 0.003 -0.009 0.002 0.012 0.004 -0.011 0.005 G191B2B 10.488 0.002 10.889 0.001 11.497 0.001 12.029 0.001 12.451 0.001 13.884 0.001 GD71 11.989 0.002 12.335 0.001 12.798 0.001 13.277 0.001 13.671 0.001 15.063 0.002 GD153 12.196 0.002 12.562 0.001 13.097 0.002 13.598 0.001 14.003 0.001 15.414 0.002 SDSSJ010322.19-002047.7 18.197 0.004 18.532 0.005 19.088 0.005 19.564 0.004 19.968 0.005 21.359 0.010 SDSSJ022817.16-082716.4 19.531 0.006 19.761 0.018 19.823 0.006 20.178 0.005 20.514 0.004 21.740 0.013 SDSSJ024854.96+334548.3 17.840 0.003 18.047 0.004 18.368 0.003 18.745 0.002 19.079 0.002 20.335 0.005 SDSSJ041053.632-063027.580 18.109 0.009 18.410 0.004 18.884 0.004 19.256 0.003 19.387 0.005 19.500 0.005 WD0554-165 16.777 0.005 17.153 0.004 17.729 0.003 18.222 0.003 18.619 0.005 20.043 0.006 SDSSJ072752.76+321416.1 17.164 0.003 17.474 0.003 17.993 0.002 18.457 0.002 18.840 0.002 20.214 0.005 SDSSJ081508.78+073145.7 18.965 0.007 19.280 0.005 19.714 0.005 20.185 0.004 20.579 0.005 21.967 0.012 SDSSJ102430.93-003207.0 18.264 0.014 18.517 0.004 18.909 0.004 19.314 0.003 19.668 0.008 20.994 0.010 SDSSJ111059.42-170954.2 17.047 0.003 17.359 0.004 17.867 0.002 18.314 0.002 18.689 0.002 20.054 0.005 SDSSJ111127.30+395628.0 17.437 0.004 17.838 0.005 18.424 0.003 18.940 0.004 19.346 0.002 20.790 0.008 SDSSJ120650.504+020143.810 18.244 0.004 18.491 0.004 18.672 0.004 19.060 0.003 19.412 0.004 20.703 0.006 SDSSJ121405.11+453818.5 16.943 0.003 17.283 0.002 17.759 0.002 18.231 0.002 18.631 0.002 20.036 0.004 SDSSJ130234.43+101238.9 16.191 0.002 16.522 0.002 17.036 0.002 17.514 0.002 17.903 0.001 19.302 0.004 SDSSJ131445.050-031415.588 18.258 0.004 18.600 0.005 19.106 0.004 19.572 0.004 19.936 0.008 21.327 0.008

Table 9 continued

30 CALAMIDA ET AL. Table 9 (continued)

Star F275W dF275W F336W dF336W F475W dF475W F625W dF625W F775W dF775W F160W dF160W

(mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag) (mag)

SDSSJ151421.27+004752.8 15.112 0.002 15.390 0.002 15.708 0.002 16.119 0.002 16.470 0.001 17.783 0.004 SDSSJ155745.40+554609.7 16.501 0.002 16.877 0.002 17.472 0.002 17.991 0.002 18.389 0.002 19.832 0.005 SDSSJ163800.360+004717.822 18.013 0.007 18.321 0.004 18.842 0.004 19.285 0.003 19.663 0.004 21.002 0.007 SDSSJ172135.97+294016.0 20.374 0.013 20.089 0.012 19.666 0.005 19.670 0.003 19.769 0.003 20.551 0.024 SDSSJ181424.075+785403.048 15.792 0.002 16.122 0.002 16.543 0.002 17.005 0.002 17.392 0.001 18.783 0.002 SDSSJ203722.169-051302.964 18.262 0.004 18.549 0.004 18.947 0.005 19.377 0.003 19.677 0.005 20.981 0.020 SDSSJ210150.65-054550.9 18.075 0.003 18.337 0.003 18.655 0.003 19.063 0.002 19.419 0.003 20.741 0.006 SDSSJ232941.330+001107.755 17.947 0.004 18.110 0.004 18.161 0.004 18.473 0.003 18.784 0.004 19.993 0.006 SDSSJ235144.29+375542.6 17.456 0.003 17.666 0.003 18.074 0.002 18.461 0.002 18.790 0.002 20.069 0.004 ILAPH Offsets . . . . . . -0.033 0.003 -0.009 0.004 -0.014 0.002 0.009 0.004 -0.012 0.005 G191B2B 10.490 0.001 10.890 0.001 11.499 0.001 12.031 0.001 12.451 0.001 13.885 0.002 GD71 11.989 0.001 12.336 0.001 12.799 0.001 13.279 0.001 13.672 0.001 15.068 0.002 GD153 12.201 0.002 12.568 0.001 13.100 0.002 13.598 0.001 14.002 0.001 15.414 0.002 SDSSJ010322.19-002047.7 18.195 0.004 18.527 0.005 19.083 0.005 19.569 0.005 19.965 0.006 21.355 0.012 SDSSJ022817.16-082716.4 19.518 0.008 19.715 0.010 19.815 0.007 20.169 0.007 20.501 0.006 21.737 0.017 SDSSJ024854.96+334548.3 17.828 0.003 18.040 0.006 18.370 0.003 18.746 0.002 19.077 0.002 20.340 0.006 SDSSJ041053.632-063027.580 18.116 0.009 18.404 0.004 18.879 0.005 19.254 0.003 19.393 0.005 19.498 0.005 WD0554-165 16.776 0.005 17.153 0.003 17.727 0.005 18.220 0.002 18.617 0.005 20.043 0.007 SDSSJ072752.76+321416.1 17.163 0.003 17.471 0.003 17.993 0.003 18.457 0.002 18.837 0.003 20.217 0.007 SDSSJ081508.78+073145.7 18.950 0.006 19.263 0.008 19.716 0.005 20.184 0.005 20.579 0.006 21.962 0.024 SDSSJ102430.93-003207.0 18.261 0.018 18.514 0.004 18.904 0.004 19.317 0.004 19.665 0.010 20.990 0.013 SDSSJ111059.42-170954.2 17.041 0.003 17.354 0.004 17.867 0.003 18.313 0.002 18.689 0.002 20.057 0.005 SDSSJ111127.30+395628.0 17.443 0.004 17.830 0.006 18.420 0.003 18.939 0.004 19.344 0.002 20.797 0.009 SDSSJ120650.504+020143.810 18.240 0.004 18.489 0.004 18.672 0.004 19.060 0.003 19.411 0.007 20.703 0.008 SDSSJ121405.11+453818.5 16.940 0.002 17.283 0.002 17.761 0.002 18.236 0.003 18.629 0.002 20.038 0.004 SDSSJ130234.43+101238.9 16.188 0.002 16.522 0.002 17.036 0.002 17.514 0.002 17.904 0.002 19.303 0.004 SDSSJ131445.050-031415.588 18.258 0.004 18.597 0.005 19.102 0.005 19.567 0.005 19.955 0.009 21.328 0.012 SDSSJ151421.27+004752.8 15.110 0.002 15.391 0.002 15.709 0.002 16.120 0.002 16.471 0.001 17.787 0.004 SDSSJ155745.40+554609.7 16.500 0.002 16.877 0.002 17.470 0.003 17.992 0.002 18.388 0.002 19.834 0.005 SDSSJ163800.360+004717.822 18.016 0.007 18.318 0.004 18.840 0.005 19.281 0.003 19.660 0.005 20.996 0.009 SDSSJ172135.97+294016.0 20.371 0.013 20.078 0.015 19.656 0.004 19.670 0.003 19.768 0.003 20.552 0.021 SDSSJ181424.075+785403.048 15.791 0.002 16.121 0.002 16.544 0.002 17.001 0.002 17.393 0.001 18.786 0.002 SDSSJ203722.169-051302.964 18.257 0.007 18.544 0.004 18.943 0.006 19.350 0.012 19.672 0.010 20.979 0.023 SDSSJ210150.65-054550.9 18.068 0.004 18.334 0.004 18.656 0.003 19.064 0.002 19.414 0.004 20.740 0.008 SDSSJ232941.330+001107.755 17.943 0.004 18.109 0.004 18.161 0.006 18.470 0.003 18.775 0.007 19.995 0.006 SDSSJ235144.29+375542.6 17.449 0.004 17.662 0.003 18.075 0.003 18.459 0.003 18.787 0.002 20.075 0.004

8. SUMMARY AND CONCLUSIONS In this paper we presented the methods used to provide sub-percent precision photometry for a set of faint candidate spectrophotometric standard DAWDs. We also presented data reduction processes, and possible source of uncertainties, of spectroscopic data collected for the same stars. These spectra are used to derive temperature and surface gravities for the candidate standards.

In order to investigate the possible sources of systematics and to derive reliable uncertainties for the DAWD photometry, we used three different software packages to reduce WFC3 data, DAOPHOT, ILAPH, and SExtractor. Our analysis showed that photometry performed with the first two packages agrees very well within uncertainties, while photometry from SExtractor shows larger dispersion and a trend for which magnitudes of fainter stars results to be fainter compared to DAOPHOT and ILAPH magnitudes, in particular in the bluest filters, F275W and F336W. This trend is probably due to SExtractor over-estimating the sky background.

We tested our data for photometric uncertainties due to the presence of external or internal persistence on the IR images. We found that the largest fraction of pixels affected by a persistence signal higher than 0.01 e^-/s is 0.33%, for images of star SDSSJ181424.075+785403.048. However, the affected pixels do not overlap with the location of the star on the images. Our observing strategy was devised to avoid selfpersistence in our exposures.

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 31

CRNL in WFC3-IR exposures was estimated to be 0.010±0.0025 mag per dex, and might slightly affect our observations. However, we do not apply any CRNL corrections on the photometry presented here and we plan to fully characterize this effect in NA19.

Our data show no systematics in the photometry due to the WFC3-UVIS shutter shading effect for an aperture radius of 7.5 pixels. We tested photometry on 1s exposures for G191B2B and we found that the dispersion of the measurements on images collected by using shutter blade B, σ = 0.004 mag, is about the same compared to the dispersion on images observed with blade A, σ = 0.005 mag. All the other DAWDs were observed with exposure times ≳ 5s, and so observations are not affected by shutter shading.

The presence of unseen companion stars could also introduce uncertainties/systematics in the photometry. However, the observed DAWDs are all in very sparse fields, with a maximum of other 3 objects including the DAWD in the ∼ 20×20^{′′} observed field of view down to g ∼ 23 mag. Our simulations also showed that stars fainter than 6 mag compared to the target WDs cannot affect the photometry of the target DAWD even if falling inside the aperture radius. We can then safely assume that the photometry of our set of standards cannot be contaminated by unseen neighbor stars.

Time-series observations collected with the LCO network of telescopes showed that most of our candidate spectrophotometric standards are stable. Two of them, namely SDSSJ20372.169-051302.964 and WD0554-165, show clear sign of variability in their light curves. The first star also show emission features in the Balmer lines of the spectra implying the presence of a low-mass companion. We do not know the origin of the variability for WD0554-165. Two other DAWDs, SDSSJ010322.10- 002047.7 and SDSSJ102430.93-003207.0 show hints of variability, but these results need to be confirmed with further data. SDSSJ20372.169-051302.964 and WD0554-165 will be excluded by our set of candidate standard DAWDs.

We used observations of the three HST primary CALSPEC standards, collected at the same time as our target DAWDs, to estimate ZPs in the AB photometric system to be applied to instrumental magnitudes of all the observed targets.

We also derived ZPs in the AB photometric system for six WFC3 filters, namely F275W, F336W, F475W, F625W, F775W and F160W, for a 10 pixel aperture radius and for infinity. The ZPs are provided in Table 8 and can be used to calibrate any WFC3-UVIS2 photometry.

We also verified for the presence of WFC3 sensitivity changes during the ∼ 1.3 years of the observations by using the same data. A decrease in sensitivity is observed in all six filters, with the largest percentage decline in sensitivity for F475W (-0.27%) and the smallest for F625W and F160W (- 0.03%), but our data do not span a sufficient time interval to fully characterize WFC3 sensitivity behavior. However, the overall dispersion of the measurements over the time interval of our observations is less than 0.5% for WFC3-UVIS and less than 1% for WFC3-IR. Therefore, we do not apply any time correction to our photometry.

We provided final calibrated AB magnitudes in five WFC3-UVIS filters and one IR filter for the 23 candidate spectrophotometric standard DAWDs and the three HST primary CALSPEC standards obtained by using the three different software packages, DAOPHOT, SExtractor and ILAPH. Magnitudes have an average dispersion in the range 1 to 3 milli-mag for WFC3-UVIS filters and 5 to 10 milli-mag for the F160W IR filter. Photometry is available as machine readable Table 9.

Synthetic magnitudes in different photometric systems, such as PS, GAIA, and SDSS, for the set of standard DAWDs will be calculated and provided in NA19.

Acknowledgments: This study was supported by NASA through grants GO-12967 and GO-13711 from the National Optical Astronomy Observatory, which is operated by AURA, Inc., and grant GO-15113 from the Space Telescope Science Institute, which is operated by AURA, Inc., under NASA contract NAS 5-26555. E. Olszewski was also partially supported by the NSF through grants AST- 1313006 and AST-1815767. This work has made use of data from the European Space Agency (ESA) mission Gaia (https://www.cosmos.esa.int/gaia), processed by the Gaia Data Processing and Analysis Consortium (DPAC, https://www.cosmos.esa.int/web/gaia/dpac/consortium). Funding for the DPAC has been provided by national institutions, in particular the institutions participating in the Gaia Multilateral Agreement.

Facility: HST (WFC3), GEMINI , GAIA, Pan-STARRS

32 CALAMIDA ET AL.

REFERENCES Adelman-McCarthy, J. K., Agüeros, M. A., Allam, S. S., et al.

2008, ApJS, 175, 297 Bertin, E. & Arnouts, S. 1996, A&AS, 117, 393 Betoule, M., Kessler, R., Guy, J., et al. 2014, A&A, 568, A22 Bohlin, R. C. 2000, AJ, 120, 437 Bohlin, R. C. 2007, in Astronomical Society of the Pacific

Conference Series, Vol. 364, The Future of Photometric, Spectrophotometric and Polarimetric Standardization, ed. C. Sterken, 315 Bohlin, R. C. 2014, AJ, 147, 127 Bohlin, R. C., Colina, L., & Finley, D. S. 1995, AJ, 110, 1316 Bohlin, R. C. & Gilliland, R. L. 2004, AJ, 127, 3508 Bohlin, R. C., Gordon, K. D., & Tremblay, P.-E. 2014, PASP, 126, 711 Brinkworth, C. S., Burleigh, M. R., Lawrie, K., Marsh, T. R., &

Knigge, C. 2013, ApJ, 773, 47 Brinkworth, C. S., Burleigh, M. R., Wynn, G. A., & Marsh, T. R.

2004, MNRAS, 348, L33 Burke, D. L., Saha, A., Claver, J., et al. 2014, AJ, 147, 19 Chambers, K. C., Magnier, E. A., Metcalfe, N., et al. 2016, ArXiv

e-prints Deustua, S. E., Mack, J., Bajaj, V., & Khandrika, H. 2017,

WFC3/UVIS Updated 2017 Chip-Dependent Inverse Sensitivity Values, Tech. rep.

Deustua, S. E., Mack, J., Bowers, A. S., et al. 2016, UVIS 2.0

Chip-dependent Inverse Sensitivity Values, Tech. rep. Dupuis, J., Chayer, P., Vennes, S., Christian, D. J., & Kruk, J. W.

2000, ApJ, 537, 977 Filippenko, A. V. 1982, PASP, 94, 715 Flewelling, H. A., Magnier, E. A., Chambers, K. C., et al. 2016,

ArXiv e-prints Fontaine, G. & Brassard, P. 2008, PASP, 120, 1043 Fukugita, M., Ichikawa, T., Gunn, J. E., et al. 1996, AJ, 111, 1748 Gaia Collaboration, Brown, A. G. A., Vallenari, A., et al. 2018,

ArXiv e-prints Gennaro, M., Bajaj, V., & Long, K. 2018, A characterization of

persistence at short times in the WFC3/IR detector, Tech. rep. Gianninas, A., Bergeron, P., & Ruiz, M. T. 2011, ApJ, 743, 138 Girven, J., Steeghs, D., Heber, U., et al. 2012, MNRAS, 425, 1013 Gorecki, A., Abate, A., Ansari, R., et al. 2014, A&A, 561, A128 Hayes, D. S., Pasinetti, L. E., & Philip, A. G. D., eds. 1985, IAU

Symposium, Vol. 111, Calibration of fundamental stellar quantities; Proceedings of the Symposium, Como, Italy, May 24-29, 1984 Hermes, J. J., Gänsicke, B. T., Gentile Fusillo, N. P., et al. 2017,

MNRAS, 468, 1946 Hilbert, B. 2009, WFC3 SMOV Program 11427: UVIS Channel

Shutter Shading, Tech. rep.

Holberg, J. B. & Bergeron, P. 2006, AJ, 132, 1221 Holberg, J. B., Bergeron, P., & Gianninas, A. 2008, AJ, 135, 1239 Holberg, J. B. & Howell, S. B. 2011, AJ, 142, 62 Hook, I. M., Jørgensen, I., Allington-Smith, J. R., et al. 2004, PASP, 116, 425 Horne, K. 1986, PASP, 98, 609 Kleinman, S. J., Kepler, S. O., Koester, D., et al. 2013, ApJS, 204, 5 Long, K. S., Baggett, S., & MacKenty, J. W. 2013, Characterizing Persistence in the WFC3 Channel: Observations of Omega Cen, Tech. rep.

Long, K. S., Wheeler, T., & Bushouse, H. 2011, IR Detector Timing and Persistence, Tech. rep.

Massey, P. & Gronwall, C. 1990, ApJ, 358, 344 Massey, P., Strobel, K., Barnes, J. V., & Anderson, E. 1988, ApJ, 328, 315 Matheson, T., Kirshner, R. P., Challis, P., et al. 2008, AJ, 135, 1598 McCook, G. P. & Sion, E. M. 1999, ApJS, 121, 1 Narayan, G., Axelrod, T., Holberg, J. B., et al. 2016, ApJ, 822, 67 Oke, J. B. 1974, ApJS, 27, 21 Oke, J. B. & Gunn, J. E. 1983, ApJ, 266, 713 Rauch, T., Werner, K., Bohlin, R., & Kruk, J. W. 2013, A&A, 560, A106 Riess, A. G. 2010, First On-orbit Measurements of the WFC3-IR Count-rate Non-Linearity, Tech. rep.

Riess, A. G. 2011, An Independent Determination of WFC3-IR Zeropoints and Count Rate Non-Linearity from 2MASS Asterisms, Tech. rep.

Riess, A. G. & Petro, L. 2010, Boosting Count-rates with Earth Limb Light and the WFC3/IR Count-rate Non-linearity, Tech. rep.

Sabbi, E. 2009, WFC3 SMOV Program 11798: UVIS PSF Core Modulation, Tech. rep.

Sahu, K., Baggett, S., & MacKenty, J. 2014, Use of the Shutter Blade Side for UVIS Short Exposures, Tech. rep.

Sahu, K., Gosmeyer, C. M., & Baggett, S. 2015, WFC3/UVIS Shutter Characterization, Tech. rep.

Schmidt, G. D., Weymann, R. J., & Foltz, C. B. 1989, PASP, 101, 713 Scolnic, D., Casertano, S., Riess, A., et al. 2015, ApJ, 815, 117 Shanahan, C. E., Gosmeyer, C. M., & Baggett, S. 2017, 2017 Update on the WFC3/UVIS Stability and Contamination Monitor, Tech. rep.

Stetson, P. B. 1987, PASP, 99, 191 Stetson, P. B. 1994, PASP, 106, 250 Stone, R. P. S. 1977, ApJ, 218, 767 Stubbs, C. W. & Brown, Y. J. 2015, Modern Physics Letters A, 30, 1530030 Welch, D. L. & Stetson, P. B. 1993, AJ, 105, 1813

PHOTOMETRY AND SPECTROSCOPY OF FAINT CANDIDATE STANDARD WHITE DWARFS 33

APPENDIX

Table 10. List of acronyms used in the manuscript grouped by class and in alphabetical order.

Acronym Meaning

Instruments/Detectors ACS Advanced Camera for Surveys GALEX Galaxy Evolution Explorer GMOS Gemini Multi-Object Spectrograph HST Hubble Space Telescope LCO Las Cumbres Observatory LSST Large Synoptic Survey Telescope MMT Multiple Mirror Telescope STIS Space Telescope Imaging spectrograph UVIS1/2 Chips of the Wide Field Camera 3 detector WFC3 - IR Wide Field Camera 3 Infrared detector WFC3 - UVIS Wide Field Camera 3 Ultraviolet and VISual detector WISE Wide-field Infrared Survey Explorer Surveys ASAS-SN All Sky Automated Survey for SuperNovae ATLAS Asteroid Terrestrial-impact Last Alert System DES Dark Energy Survey PS Pan-STARSS SDSS Sloan Digital Sky Survey ZTF Zwicky Transient Factory Software packages ALLFRAME Routine to perform simultaneous point-spread function photometry on different images (Stetson 1994) DAOPHOT DAOPHOTIV group of routines to perform aperture and point-spread function photometry (Stetson 1987) Drizzle Pac Software to stack images collected with Hubble Space Telescope ILAPH IDL routines to perform aperture photometry from Abhijit Saha SExtractor Source Extractor software to perform aperture and point-spread function photometry (Bertin & Arnouts 1996) Others AS Artificial star cal_wf3 Image calibration pipeline for the Wide Field Camera 3 detectors CALSPEC Database of the Hubble Space Telescope spectrophotometric standard stars CTE Charge Transfer Efficiency CR Cosmic ray CRNL Count-Rate Non-Linearity DAWD Hydrogen atmosphere white dwarf FoV Field of view FLUXCORR Image header keyword indicating if the flux scaling needs to be performed FWHM Full-Width Half maximum IMPHTTAB Image photometry reference table IR-FIX Fixed Aperture centered on the Wide Field Camera 3 Infrared detector IRSUB256-FIX 256×256 pixel sub-aperture on the center of the Wide Field Camera 3 Infrared detector IRSUB512-FIX 512×512 pixel sub-aperture on the center of the Wide Field Camera 3 Infrared detector MODTRAN MODerate resolution atmospheric TRANsmission NIR Near-infrared PAM Pixel Area Map PHOTFLAM Image header keyword for the inverse sensitivity PSF Point-spread function

Table 10 continued

34 CALAMIDA ET AL. Table 10 (continued)

Acronym Meaning

SED Spectral Energy Distribution UV Ultraviolet UVIS1-FIX Fixed Aperture centered on the UVIS1 chip of the Wide Field Camera 3 Ultraviolet and VISual detector UVIS2-C512C-SUB 512×512 pixel sub-aperture on the corner of the UVIS2 chip of the Wide Field Camera 3 Ultraviolet and VISual detector ZP Zero point