arXiv:1907.06852v1 [eess.IV] 16 Jul 2019

AirwayNet: A Voxel-Connectivity Aware Approach for Accurate Airway Segmentation Using Convolutional Neural Networks

Yulei Qin^{1,2}, Mingjian Chen^{1,2}, Hao Zheng^{1,2}, Yun Gu^{1,2}, Mali Shen^4, Jie Yang^{1,2⋆}, Xiaolin Huang^{1,2}, Yue-Min Zhu^3, and Guang-Zhong Yang^{2,4}

1 Institute of Image Processing and Pattern Recognition, Shanghai Jiao Tong University, Shanghai, China

jieyang@sjtu.edu.cn

2 Institute of Medical Robotics, Shanghai Jiao Tong University, Shanghai, China 3 CREATIS (CNRS UMR 5220, INSERM U1206), INSA Lyon, Lyon, France 4 Hamlyn Centre for Robotic Surgery, Imperial College London, London, UK

Abstract. Airway segmentation on CT scans is critical for pulmonary disease diagnosis and endobronchial navigation. Manual extraction of airway requires strenuous efforts due to the complicated structure and various appearance of airway. For automatic airway extraction, convolutional neural networks (CNNs) based methods have recently become the stateof-the-art approach. However, there still remains a challenge for CNNs to perceive the tree-like pattern and comprehend the connectivity of airway. To address this, we propose a voxel-connectivity aware approach named AirwayNet for accurate airway segmentation. By connectivity modeling, conventional binary segmentation task is transformed into 26 tasks of connectivity prediction. Thus, our AirwayNet learns both airway structure and relationship between neighboring voxels. To take advantage of context knowledge, lung distance map and voxel coordinates are fed into AirwayNet as additional semantic information. Compared to existing approaches, AirwayNet achieved superior performance, demonstrating the effectiveness of the network’s awareness of voxel connectivity.

1 Introduction

Pulmonary diseases, including chronic obstructive pulmonary diseases (COPD) and lung cancer, pose high risks to human health. The standard computed tomography (CT) helps radiologists detect pathological changes. For tracheal and bronchial surgery, airway tree modeling on CT scans is often considered a prerequisite. Meticulous efforts are required to manually segment airway due to its tree-like structure and variety in size, shape, and intensity.

⋆ Corresponding author: Jie Yang. This research is partially supported by National Natural Science Foundation of China (No. 61572315, 61603248), IMR2018QY01, 973 Plan of China (No. 2015CB856004), and Committee of Science and Technology, Shanghai, China (No. 17JC1403000).

Several methods have been proposed for airway segmentation on CT images. Van Rikxoort et al. [10] proposed a region growing method with adaptive thresholding. Xu et al. [11] combined two tubular structure enhancement techniques within the fuzzy connectedness segmentation framework. Lo et al. [6] designed a learning-based approach that models airway appearance and utilized vessel orientation similarity. In the EXACT’09 challenge, fifteen airway extraction algorithms were summarized by Lo et al. [7]. Most algorithms adopted region growing with additional constraints such as tube likeness. Although successfully segmenting bronchi of large size, these conventional methods performed worse on peripheral bronchi.

Recently, convolutional neural networks (CNNs) were increasingly used in segmentation tasks [2, 9]. For airway extraction, CNNs-based methods [1, 3, 4, 8, 12] were developed and proved superior to previous methods in [7]. Charbonnier et al. [1] and Yun et al. [12] respectively used two-dimensional (2-D) and 2.5-D CNNs on already coarsely segmented bronchi to reduce false positives and increase detected tree length. Meng et al. [8] embedded CNNs-based segmentation into the airway volume of interest (VOI) tracking framework. Jin et al. [3] employed graph-based refinement on the probability output of CNNs. Juarez et al. [4] designed an end-to-end CNN model with simple pre- and post-processing. Despite their satisfactory performance, these methods did not specifically take airway connectivity into consideration, leaving room for improvement.

In this paper, we propose AirwayNet, a CNNs-based approach for accurate airway segmentation. Considering that the tree-like structure of airway is rather complex and the prediction of airway candidates is prone to discontinuity, we put emphasis on the connectivity of airway voxels. Unlike previous methods, we do not directly train the network to classify foreground and background voxels. Instead, binary segmentation task is transformed into 26 tasks of predicting whether a voxel is connected to its neighbors. Since airway voxels are stretching from the main bronchus towards bronchiole end as a whole connected region, we consider it a good solution to enable the model being aware of voxel connectivity. Previous work on salient segmentation [5] demonstrated that connectivity modeling spontaneously encodes the relation between two pixels. Therefore, we design a voxel connectivity-aware approach to better comprehend the inherent structure of airway. Our main contributions can be summarized as follows: (1) The voxel connectivity of airway is modeled using conventional binary ground-truth labels to better serve the airway segmentation task. The proposed AirwayNet automatically learns relationship between adjacent voxels and discriminates airway from the background. For each voxel, the network predicts not only its probability of being airway but also its connectivity to neighbors. (2) To effectively utilize wide-range context knowledge, voxels’ coordinates and their distance to lung borders are leveraged by the model as additional semantic information. (3) Trained using 20 cases and evaluated on 10 additional cases, AirwayNet achieved the highest Dice coefficient and true positive rate of 90.2%, 84.7%, respectively, compared to state-of-the-art methods.

2 Method

In this section, we first introduce how to model voxel connectivity and transform the segmentation problem into connectivity prediction problem. Then, details about CT pre-processing and the 3-D CNNs-based connectivity prediction are provided. Finally, we discuss the generation process of airway candidates. The flowchart of the proposed AirwayNet is depicted in Fig. 1.

Fig. 1. Flowchart of the proposed AirwayNet.

2.1 Connectivity Modeling Using Binary Ground-truth Labels

In a three-dimensional (3-D) CT, 26-connectivity describes well the relation between one voxel and its 26 neighbors (see Fig. 2). Given a voxel P = (x, y, z) and its neighbor Q = (u, v, w), the distance between P and Q is restricted by d(P, Q) = max(|(x − u)|, |(y − v)|, |(z − w)|) ≤ 1, which means that Q is located within a 3 × 3 × 3 cube centered at P . We index neighbors Q from 1 to 26 and denote each voxel pair (P, Q_i), i ∈ {1, 2, ..., 26} as a connectivity orientation. Each orientation is encoded using a 1-channel binary label. If both P and Q_i are airway voxels, then the pair (P, Q_i) is connected and the corresponding position “P ” on the i-th label is marked as 1. Otherwise, we mark 0 on the i-th label to represent disconnected pair (P, Q_i). By sliding such a 3 × 3 × 3 window over each voxel, we obtain 26 binary labels and concatenate them into a 26-channel connectivity label. Zero padding is performed on CT volume borders to keep the size of generated labels unchanged. Such connectivity label encodes both groundtruth position and 26-connectivity relation between airway voxels. Note that all operations are performed on conventional binary labels of airway ground-truth. We do not require extra manual annotation for connectivity labels.

After modeling the 3-D connectivity, the original airway ground-truth label is reformed, and the conventional segmentation task is then transformed into 26 connectivity prediction tasks. The objective here is to classify and merge connected airway voxels along each connectivity orientation. An advantage of decomposing one task into 26 different tasks is that multi-task learning strategy helps the network learn more generalized features. These 26 tasks are correlated in depicting voxel connectivity, so that our AirwayNet can extract essential and robust features. Furthermore, the connectivity label emphasizes airway’s structure attribute. The network trained using such label is encouraged to grasp the tree-like pattern of bronchial airway.

Fig. 2. Illustration of 26-connectivity modeling. The binary ground-truth of airway (Dim: 1 × Z × H × W ) is transformed into a connectivity label (Dim: 26 × Z × H × W ).

2.2 CT Volume Pre-processing

One challenge in airway segmentation is that the foreground voxels only occupy a small proportion of all CT voxels. To avoid feature learning from irrelevant parts (e.g., ribs and skin), we restrict the valid airway candidate region inside the lung area. To extract lung mask, each CT slice is first filtered with a Gaussian filter (σ = 1) and binarized with a threshold (−600 Hounsfield unit). The connected component analysis is applied to remove unconfident candidates and the largest two components are chosen as left and right lungs, respectively. To avoid undersegmentation, we replace the lung area by its convex hull on each slice if the convex hull has 50% more area. We also perform Euclidean distance transform on the lung mask to calculate the distance map. Each voxel on the distance map records its minimum distance to the lung border. We add such map into the network because the airway’s relative position to lung border is considered anatomically meaningful. To prepare for network training, CT voxel intensity is clipped by a window [−1000, 600] (HU) and normalized to [0, 255]. Due to the limit of GPU memory, the bounding box of lungs is further cropped into smaller cubes using a sliding window technique. The cropped size is 32 × 224 × 224 and the sliding stride is [8, 56, 56]. Such cubes include abundant context knowledge for our model to distinguish between the airway and the background.

2.3 Connectivity Prediction Based on 3-D CNNs

Given a cropped CT cube, the objective is to use 3-D CNNs to predict voxel connectivity of the cube. The proposed AirwayNet (see Fig. 3) is based on the U-Net [2] backbone. Our full 3-D architecture captures more spatial information than the 2-D or 2.5-D CNNs used in [1, 12] and is more suitable for learning the bronchial continuity and branching patterns. The AirwayNet consists of a contracting path and an expansive path with four resolution scales. At each resolution scale, the contracting path has two convolution layers (Conv) with batch normalization (BN) and rectified linear unit (ReLU), followed by a maxpooling layer. In the expansive path, finer features from lower resolution scale are linearly upsampled first and then concatenated with coarse features from skip connection to preserve details of thin bronchi. Since airway voxels are distributed within the large thoracic cavity, extra semantic information other than grayscale intensity is considered beneficial for the model to classify airway voxels. Here we use voxel coordinates and lung distance map, and concatenate them with features on the expansive path at the last scale. The sigmoid function is applied on the predicted connectivity cube to obtain probability distribution. We use the Dice similarity coefficient (DSC) loss to optimize our AirwayNet. For each voxel x in the cropped cube X, given its label y_i(x) and prediction probability p_i(x), i ∈ {1, 2, ..., 26}, the total connectivity loss is defined as the averaged DSC loss over all channels:

L = 1 − 1 26 26∑ i=1 2 ∑ x∈X p_i(x)y_i(x) ∑ x∈X (p_i(x) + y_i(x)) + ϵ

, (1)

where ϵ is used to avoid division by zero.

2.4 Airway Candidates Generation

The final step is to generate airway candidates based on the predicted connectivity cube. First, a threshold t = 0.5 is used to binarize prediction results. Here we consider that pairwise voxels should agree with each other in connectivity. For example, if voxel P is connected to its neighbor Q_{14} (see Fig. 2), then voxel P on the 14-th connectivity channel is marked as 1. Meanwhile, on the 13-th channel, voxel Q_{14} is marked as 1 because P is also at the position “Q_{13}” of the 3 × 3 × 3 neighborhood of Q_{14}. The connectivity between P and Q_{14} is coded in both the 13-th and the 14-th channels. Therefore, we only keep voxels that comply with such pairwise agreement. Then, channel-wise summation is performed on the connectivity cube and those non-zero voxels are marked as airway candidates. The segmentation results are multiplied with the lung field mask to filter out false positives. Finally, we follow [3] to apply fuzzy connectedness segmentation on the generated candidates to consolidate the bronchial distal ends.

3 Experiments and Results

The experiment dataset contains 30 chest CT scans. All CT axial slices have the same size of 512×512, with a pixel spacing ranging from 0.5 to 0.781 mm.

Fig. 3. The architecture of the 3-D CNNs used in the proposed AirwayNet. The number of channels is denoted above each feature map.

Table 1. Comparison of airway segmentation results (%) on 10 chest CT scans.

Case

AirwayNet Jin et al. [3] Juarez et al. [4] DSC TPR FPR PPV DSC TPR FPR PPV DSC TPR FPR PPV 1 92.4 86.5 0.003 99.2 90.4 84.4 0.010 97.2 91.0 83.8 0.002 99.5 2 87.5 78.5 0.003 98.8 73.8 60.8 0.011 94.0 76.9 62.6 0.000 99.8 3 91.1 85.3 0.004 97.7 88.9 83.1 0.008 95.6 91.1 84.6 0.002 98.8 4 82.9 73.1 0.009 95.7 79.6 66.5 0.002 99.1 70.8 55.6 0.004 97.4 5 90.8 86.2 0.015 95.9 90.6 85.3 0.012 96.6 89.3 81.4 0.003 99.1 6 91.5 89.2 0.025 94.0 84.5 88.3 0.091 81.0 92.3 87.9 0.012 97.1 7 90.6 87.6 0.025 93.7 88.2 85.3 0.034 91.2 90.3 85.1 0.014 96.2 8 91.7 88.9 0.017 94.7 86.4 88.1 0.054 84.8 90.2 86.5 0.018 94.2 9 93.1 88.8 0.009 97.8 90.5 84.3 0.009 97.7 85.9 75.9 0.004 98.9 10 90.4 83.2 0.003 98.9 88.2 79.3 0.002 99.4 88.3 79.4 0.001 99.5 Mean 90.2 84.7 0.011 96.6 86.1 80.5 0.023 93.7 86.6 78.3 0.006 98.1 Std. 2.8 4.9 0.008 1.9 5.2 8.9 0.027 5.9 6.7 10.3 0.006 1.7

The slice thickness varies from 0.5 to 1.0 mm. These scans were acquired using different scanners, protocols, dose level, and reconstruction kernels. The dataset contains cases from both healthy volunteers and patients with severe pulmonary diseases (e.g., emphysema and pneumonia). The ground-truth labels of airway were annotated and screened by well-trained experts for verification. We randomly chose 20 CT scans for training and fine-tuning hyper-parameters. Our approach was evaluated on the remaining 10 scans.

During training, cropped cubes were augmented on-the-fly via random horizontal flipping, with a probability of 0.5. We densely sampled cubes near airway region and discarded cubes near lung border randomly. This results in around 5000 training samples for each epoch. The Adam optimizer (β_1 = 0.5, β_2 = 0.999) was used and the learning rate was set to 10^{−4}. The training converged after 15 epochs. Our AirwayNet was implemented in Keras with 4 NVIDIA Titan Xp GPUs. During testing, the stride of the sliding window was [16, 128, 128] and the prediction results were averaged on overlapping margins. Four evaluation metrics were used: (a) Dice coefficient (DSC), (b) True positive rate (TPR), (c) False positive rate (FPR), and (d) Positive predictive value (PPV).

We compared our AirwayNet with two state-of-the-art approaches, Jin’s method [3] and Juarez’s method [4]. They both employ 3-D CNNs with a sliding window technique for airway extraction. In Table 1, it is observed that our method achieved the highest DSC and TPR of 90.2%, 84.7%, respectively, with the comparable FPR of 0.011% and PPV of 96.6%. The smallest standard deviation of DSC and TPR was achieved by AirwayNet, confirming its robustness. With lower DSC, TPR, and FPR but higher PPV, Juarez et al. [4] segmented more conservatively than AirwayNet and the proposed method slightly tended to classify background voxels as airway. But our TPR is 6.4% higher than theirs on average, meaning that more airway voxels were detected by AirwayNet. In addition, qualitative results of the proposed AirwayNet are shown in Fig. 4, together with its comparison with [3, 4]. Owing to connectivity modeling, our method enriched details of segmented peripheral bronchi. In contrast, more holes and cracks appear on the predicted bronchial airway of other methods.

We also conducted ablation study (see Table 2) to validate whether each component of the proposed method is useful. Compared to AirwayNet without Conn and D&C, the slightly higher FPR and lower PPV of AirwayNet may be due

Fig. 4. Comparison of airway segmentation results. Local bronchial branches are highlighted with circles and zoomed in to better see performance difference.

to the introduction of connectivity modeling and semantic information, making the model more sensitive and perceptive to airway than background. Meanwhile, the improvement in DSC and TPR proves that it is worthwhile to enable the model being aware of connectivity and semantic knowledge. Furthermore, the application of fuzzy connectedness segmentation links the tiny bronchial ends together, improving the DSC and TPR by 0.1%, 0.3% on average, respectively. These three components do contribute to the performance improvement.

According to Table 1 and Fig. 4, our AirwayNet clearly improves the connectivity and shape reconstruction of airway but is not yet 100% perfect, mainly due to the fact that the used training samples did not reflect all the situations including weak intensity contrast between airway lumen and wall, blurring from low quality imaging, and pathological changes of pulmonary diseases.

4 Conclusion

This paper proposed a CNNs-based approach, AirwayNet, for airway segmentation on CT scans. It explicitly learns voxel connectivity to perceive airway’s inherent structure. By connectivity modeling, conventional segmentation task is transformed into 26 tasks of connectivity prediction, with each task classifying airway voxels along a certain connectivity orientation. The lung distance

Table 2. Results (%) of ablation study of AirwayNet (mean±standard deviation). The Conn, D&C, and FCS represent connectivity modeling, distance map & coordinates, and fuzzy connectedness segmentation, respectively. Note that without Conn, the task of AirwayNet becomes a common segmentation task and the network is directly trained to output binary masks of airway.

Methods DSC TPR FPR PPV AirwayNet w/o Conn 87.1±6.4 79.3±9.6 0.007±0.008 97.6±2.5 AirwayNet w/o D&C 88.4±5.4 81.6±8.7 0.009±0.009 97.1±2.1 AirwayNet w/o FCS 90.1±2.8 84.4±4.9 0.011±0.008 96.8±1.9 AirwayNet 90.2±2.8 84.7±4.9 0.011±0.008 96.6±1.9

map and voxel coordinates are introduced as additional semantic information to better utilize context knowledge. Experimental results corroborated the two main strengths of AirwayNet: (1) the model’s attention paid on the connectivity of airway structure and (2) the extra knowledge about voxels’ position and their distance to lung borders. Consequently, the performance improvement is achieved on peripheral airway segmentation. In the future, the proposed method could further be improved by working on (1) the adoption of generative adversarial networks to produce various training samples to improve robustness on unhealthy patients’ scans and (2) the exploration of specific enhancement mechanisms for thin bronchus details in low quality CT scans to improve performance.

References

1. Charbonnier, J.P., Van Rikxoort, E.M., Setio, A.A., Schaefer-Prokop, C.M., van Ginneken, B., Ciompi, F.: Improving airway segmentation in computed tomography using leak detection with convolutional networks. MedIA 36, 52–60 (2017) 2. Çiçek, Ö., Abdulkadir, A., Lienkamp, S.S., Brox, T., Ronneberger, O.: 3D U-Net:

learning dense volumetric segmentation from sparse annotation. In: MICCAI. pp. 424–432. Springer (2016) 3. Jin, D., Xu, Z., Harrison, A.P., George, K., Mollura, D.J.: 3D convolutional neural networks with graph refinement for airway segmentation using incomplete data labels. In: MLMI. pp. 141–149. Springer (2017) 4. Juarez, A.G.U., Tiddens, H., de Bruijne, M.: Automatic airway segmentation in chest CT using convolutional neural networks. In: Image Analysis for Moving Organ, Breast, and Thoracic Images, pp. 238–250. Springer (2018) 5. Kampffmeyer, M., Dong, N., Liang, X., Zhang, Y., Xing, E.P.: Connnet: A longrange relation-aware pixel-connectivity network for salient segmentation. IEEE TIP 28(5), 2518–2529 (2019) 6. Lo, P., Sporring, J., Ashraf, H., Pedersen, J.J., de Bruijne, M.: Vessel-guided airway tree segmentation: A voxel classification approach. MedIA 14(4), 527–538 (2010) 7. Lo, P., Van Ginneken, B., Reinhardt, J.M., Yavarna, T., De Jong, P.A., Irving, B., Fetita, C., Ortner, M., Pinho, R., Sijbers, J., et al.: Extraction of airways from CT (exact’09). IEEE TMI 31(11), 2093–2107 (2012) 8. Meng, Q., Roth, H.R., Kitasaka, T., Oda, M., Ueno, J., Mori, K.: Tracking and segmentation of the airways in chest CT using a fully convolutional network. In: MICCAI. pp. 198–207. Springer (2017) 9. Ronneberger, O., Fischer, P., Brox, T.: U-Net: Convolutional networks for biomedical image segmentation. In: MICCAI. pp. 234–241. Springer (2015) 10. Van Rikxoort, E.M., Baggerman, W., van Ginneken, B.: Automatic segmentation of the airway tree from thoracic CT scans using a multi-threshold approach. In: Proc. of Second International Workshop on Pulmonary Image Analysis. pp. 341– 349 (2009) 11. Xu, Z., Bagci, U., Foster, B., Mansoor, A., Udupa, J.K., Mollura, D.J.: A hybrid method for airway segmentation and automated measurement of bronchial wall thickness on CT. MedIA 24(1), 1–17 (2015) 12. Yun, J., Park, J., Yu, D., Yi, J., Lee, M., Park, H.J., Lee, J.G., Seo, J.B., Kim, N.: Improvement of fully automated airway segmentation on volumetric computed tomographic images using a 2.5 dimensional convolutional neural net. MedIA 51, 13–20 (2019)