arXiv:2008.13635v1 [astro-ph.SR] 31 Aug 2020

Draft version September 1, 2020 Typeset using L^ATEX default style in AASTeX63

A Survey of 3 to 5.4 μm Emission From Planetary Nebulae using SOFIA/FLITECAM

Erin C. Smith,^1 Sarah E. Logsdon,^2 Ian S. McLean,^3 Elizabeth Fletcher,^4 William D. Vacca,^5 E. E. Becklin,^{5, 3} Sachindev Shenoy,^6 Maureen Savage,^7 and Ryan T. Hamilton^8

1NASA Goddard Space Flight Center, Greenbelt, MD 20771 2NSF’s National Optical-Infrared Astronomy Research Laboratory, Tucson, AZ 85719 3Department of Physics and Astronomy, UCLA, Los Angeles, CA 90095-1547 4Department of Physics, Astronomy and Geosciences, Towson University, Towson, MD 21252 5SOFIA-USRA, NASA Ames Research Center, Moffet Field, CA 94035-1000 6Space Science Institute, Boulder CO 7UCO Lick Observatories, 1156 High St, Santa Cruz, CA 95064 8Lowell Observatory, Flagstaff, AZ 86001

(Accepted ApJ)

ABSTRACT Here we present the results of an airborne 3-5.4 μm spectroscopic study of three young, Carbonrich planetary nebulae IC 5117, PNG 093.9-00.1, and BD +30 3639. These observations were made using the grism spectroscopy mode of the FLITECAM instrument during airborne science operations onboard NASA’s Stratospheric Observatory for Infrared Astronomy (SOFIA). The goal of this study is to characterize the 3.3 μm and 5.25 μm PAH dust emission in planetary nebulae and study the evolution of PAH features within evolved stars before their incorporation into new stellar systems in star-forming regions. Targets were selected from IRAS, KAO and ISO source lists, and were previously observed with FLITECAM on the 3-meter Shane telescope at Lick Observatory to allow direct comparison between the ground and airborne observations. We measure PAH emission equivalent width and central wavelength, classify the shape of the PAH emission, and determine the PAH/Aliphatic ratio for each target. The 3.3 μm PAH emission feature is observed in all three objects. PNG 093.9-00.1 exhibits NGC 7027-like aliphatic emission in the 3.4–3.6 μm region while IC 5117 and BD +30 3639 exhibit less aliphatic structure. All three PNs additionally exhibit PAH emission at 5.25 μm.

Keywords: infrared: general — techniques: spectroscopic — planetary nebulae: general — stars: AGB and post-AGB — astrochemistry: PAHs–Observatory: SOFIA

1. INTRODUCTION Due in part to their ubiquity, the broad infrared spectral features at 3.3, 6.2, 7.7, 8.6, 11.3 and 12.7 μm are an important focus of near and mid-infrared astronomy. Originally referred to as the Unidentified Infrared Bands (UIB), through comparisons with laboratory data, they are generally attributed to the vibrational, bending and stretching modes of the C–H and C–C bonds in Polycyclic Aromatic Hydrocarbons (PAHs) (Gillett et al. 1975; Sellgren 1984; Leger and Puget 1984). PAHs are assemblies of benzene-ring like structures, and include molecules such as Pyrene, Naphthalene, and Coronene, which when excited by absorption of a UV photon, relax through emission in the infrared (van Diedenhoven et al. 2004). These broad emission features have been observed in a wide range of astronomical objects, including planetary nebulae (PNs), HII regions, proto-stellar clouds and star-forming galaxies (e.g. Peeters et al. 2004; Hora et al. 2004). This has led to several studies aimed at correlating PAH emission with physical properties of the observed region (e.g. Tokunaga et al. 1991; Roche et al. 1996a; Cohen and Barlow 2005; van Diedenhoven et al. 2004). While the laboratory spectrum of individual PAHs is known, mixing makes identification

Corresponding author: Erin C. Smith erin.c.smith@nasa.gov

of individual PAHs in astronomical environments extremely difficult (See section II Allamandola et al. 1989b), resulting in descriptions of overall PAH population characteristics and environmental variations rather than identification of specific PAHs (Peeters et al. 2002) .

PAH formation is believed to occur in the last stages of evolution of carbon-rich low- and intermediate-mass stars. Smith & McLean (2008) and Roche et al. (1996a) used the 3.3 μm band to determine the minimum C/O abundance ratios for PAH emission. They found ‘cutoff’ C/O abundance ratios of 0.65 ± 0.28 and 0.77 ± 0.5, respectively. Cohen and Barlow (2005) similarly used the 7 and 8 μm bands to find a C/O threshold ratio of 0.54 ± 0.3. This supports the hypothesis that Carbon-rich planetary nebulae produce hydrocarbons including PAHs (See section IV Allamandola et al. 1989b).

The most prominent hydrocarbon band in the 3-5.5μm region is a broad feature centered at 3.3μm, which sits on top of an extended plateau of emission, extending from ∼3.2μm to ∼3.6μm (Maltseva et al. 2018, and references therein) In most PAH emitting objects this is accompanied by a weaker band of emission beginning at 3.4μm and extending to nearly 3.6 μm. This feature is believed to arise from emission from the C–H stretching of aliphatics, chemical subgroups which do not show the alternating double- and single-bond structure between Carbon atoms that aromatic compounds exhibit (Duley & Williams 1981). Proposed carriers include aliphatic side-groups (such as methyl) attached to the outer carbon molecules of PAH assemblies (Duley & Williams 1981; Yang et al. 2017), and HnPAHs, hydrogenated PAH molecules with additional hydrogen molecules attached to the carbon ring (Bernstein et al. 1996). Comparison of 3 μm spectra to laboratory spectra of methyl-coronene (Joblin et al. 1996)and HnPAHs (Bernstein et al. 1996) support both the side-group and HnPAH models. Sloan et al. (1997) suggested a mixed chemistry involving both side-groups and HnPAHs could be responsible for the observed 3.4 μm emission in the Orion Bar. Detailed experimental work on PAH emission in the 3μm region has been published recently by Maltseva et al. (2018). These authors show that hydrogenated PAHs form an important fraction of the IR emission carriers in regions with an anomalously strong 3.2 to 3.6μm plateau. For simplicity, in this paper we refer to the 3.4 μm complex that sits atop the 3.2μm to 3.6μm plateau as the ‘aliphatic feature’ and the 3.3 μm complex that sits above the plateau as the ‘PAH feature’.

In addition to the features in the 3.2 to 3.6 μm region, several studies have also noted the presence of PAH bands at 5.25 and 5.7 μm including on KAO (Allamandola et al. 1989a), with UKIRT (Roche et al. 1996b), and with ISO (Boersma et al. 2009). These features have been observed in a small number of planetary nebulae (e.g. NGC 7027, PNG 093.9-00.1, and BD +30 3639 Roche et al. 1996b; Boersma et al. 2009), as well as objects like the Orion Bar (Boersma et al. 2009). Boersma et al. (2009) used observational, laboratory and theoretical data to investigate this feature. They attributed the 5.25 and 5.7 μm emission to combinations of CH stretching and CH in-plane and outof-plane bending modes and found that the 5.25 and 5.7 μm features preferentially arise from large, compact PAHs, rather than irregularly shaped molecules.

This study uses guaranteed time observations (GTO) made using the Stratospheric Observatory for Infrared Astronomy (SOFIA) and the FLITECAM (First Light Test Experiment Camera) instrument to investigate the 3– 5.41 μm spectra of three young, carbon-rich planetary nebulae. It has three purposes: investigate the properties of 3.3 μm PAH emission in these planetary nebulae by expanding the analysis performed by Roche et al. (1996a) and Cohen et al. (1989); examine the 3.4 μm aliphatic emission in these objects and characterize any 5.25 μm PAH emission if detected.

Target selection, the FLITECAM grism mode, and the observations are all described in §2, data reduction methods are explained in §3, and results and discussion are presented in §4. Finally, conclusions are given in §5.

2. OBSERVATIONS 2.1. Target Selection The three objects in this study (IC 5117, PNG 093.9-00.1, and BD +30 3639) are young, carbon-rich planetary nebulae with known 3.3 μm emission (Roche et al. 1996a; Sahai et al. 2011). Young PNs have only recently begun to exhibit the ionized shells of dust and gas lost during a star’s post-AGB phase. The central stars of young PNs tend to have lower effective temperatures than more evolved PNs (Sahai et al. 2011). Additionally, young PNs tend to be compact, with significant dust opacities (Kwok 1994). The study of young PNs allows astronomers to study post-AGB mass loss, to understand the dynamical forces which shape nebular structure, and to investigate the initial stages of dust formation, all of which is made more difficult in older PNs, which can be affected by interactions with the ISM, the influence of the central star wind, and the effects of photoionization (Sahai et al. 2011).

BD +30 3639 is a bright, young Planetary Nebulae with a spectral classification of [WC9] (Heller et al. 2018; Weidmann & Gamen 2011), and a central star temperature of ∼47,000 K (Leuenhagen et al. 1996). BD +30 3639 exhibits 3.3 μm and aliphatic emission as well as 5.25 μm emission (Allamandola et al. 1989a). IC 5117 is a very compact PN which exhibits bi-polar outflows, molecular hydrogen emission and aliphatic emission in the 3.4 μm region (Kwok 1985; Cohen and Barlow 2005). Hyung et al. (2001) found an evolutionary age of ∼7000 yr for IC 5117. The central star of IC 5117 has been estimated to be ∼120,000 K (Hyung et al. 2001), substantially hotter than that in BD +30 3639. The high-temperature central star may explain why IC 5117 exhibits high-energy forbidden line emission (Hyung et al. 2001). PNG 093.9-00.1 (also called IRAS 21282+5050) is a young, low excitation PN with a [WC11] spectral type (Meixner et al. 1993; Kwok et al. 1993) and a ∼28,000 K central star (Leuenhagen & Hamann 1998). It exhibits an abnormally large infrared excess and multipolar morphology (Hsia et al. 2019). PNG 093.9-00.1 is believed to be evolutionarily younger than both IC 5117 and BD +30 3639, with an evolutionary age of ∼5000 yr (Shibata et al. 1989).

IC 5117, PNG 093.9-00.1 and BD +30 3639 have been previously observed by FLITECAM in a ground-based survey using the Shane 3-meter telescope at Lick Observatory, Mt. Hamilton, CA (Smith & McLean 2008). The Smith & McLean (2008) survey measured the 3.3 μm PAH emission in all three targets, but atmospheric water vapor made examination of the 3.4 μm aliphatic feature difficult. Likewise, the 5.25 μm feature was unobservable from the ground. These three objects were selected for airborne observations because the strength of their PAH emission made them optimal targets for detection of aliphatic and 5.25 μm emission if present.

2.2. Instrumentation Observations of all three objects were carried out with FLITECAM. FLITECAM is a 1–5.41 μm camera developed at the UCLA Infrared Laboratory under the leadership of Dr. Ian McLean for NASA’s SOFIA project (McLean et al. 2006). SOFIA is a modified Boeing 747-SP airplane with a 2.5-meter f/19.6 bent-Cassegrain telescope operating at altitudes up to 45,000 ft and therefore above 99% of the atmosphere’s water vapor content (Waddell & Davidson 2002). Performance and technical details of the instrument are described in McLean et al. (2006). FLITECAM was commissioned aboard SOFIA in 2015 (Smith et al. 2014; Logsdon et al. 2014, 2016), but because FLITECAM operates in the near-infrared, and because the f/17 optics of the Lick 3-meter telescope provides a plate scale similar to that of SOFIA, FLITECAM was also commissioned in October 2002 at Lick Observatory in a ground based configuration (Mainzer and McLean 2003). FLITECAM was retired from SOFIA operations in 2018.

FLITECAM utilizes large refractive optics to inscribe an ∼8 arc minute diameter FOV on a 1024x1024 InSb AL- ADDIN III detector with a plate scale of 0.475 arc seconds per pixel. FLITECAM was designed as an imaging camera, but also has a suite of three grisms which allow for nearly full coverage of the 1-5.41μm range at a resolution of R ∼1300-1800. The instrument can be operated in either the up-looking position (Lick) or the horizontal position (SOFIA). Although these measurements were made in the FLITECAM-only mode, FLITECAM can be co-mounted with another SOFIA instrument, HIPO (High-speed Imaging Photometer for Occultations) to provide simultaneous coverage of the optical and near-infrared bands (Dunham et al. 2014, 2004; Logsdon et al. 2014).

FLITECAM features a dual filter wheel which houses standard broadband filters, several narrow band filters plus a suite of three direct-ruled KRS-5 grisms and their appropriate order-sorting filters. Each grism can be used in one of three orders giving a total of 9 settings to nearly cover the entire 1–5.41 μm region. The KRS-5 grisms provide a moderate resolution spectroscopy mode in conjunction with fixed slits of either 1^{′′} or 2^{′′} width and 60^{′′} total length to yield resolving powers of R∼1800 and 1300 respectively (Smith and McLean 2006). See Table 1 for details of the FLITECAM grism mode. The 3-3.365μm range was observed with the LM order sorting filter and the C grism. This combination is referred to as the LMC band. The 3.365-4.1μm range was observed with the LM order sorting filter and the B grism, referred to as the LMB band. There is an overlap between the LMC and LMB bands starting near the 3.3μm feature peak, and continuing to 3.4μm . The transition between LMC and LMB data was chosen to fall at 3.365μm to avoid both the 3.3 and 3.4 micron features. The 4.4-5.41μm range was observed with the LM order sorting filter and the A grism. This is referred to as the LMA band.

2.3. Observations Observations were obtained over the course of three separate observing flights onboard SOFIA in October 2016.

Spectroscopic observations were made in a standard ABBA nod pattern. Individual exposures ranged from 30-80s per observation, depending on target and wavelength band.The object was nodded between two positions, designated A and B, separated by ∼20^{′′} on the ∼60^{′′} long entrance slit of FLITECAM. Signal-to-noise ratios were typically greater than 10 (10%) per resolution element. Seeing conditions were ∼ 2.^{′′}0 − 3.^{′′}0 and a slit width of 2.^{′′}0 (∼4 pixels) was used for all observations. Each object was observed in at least three grism modes, providing coverage from ∼2.8 μm to 5.41 μm, except for the 4.2-4.4 μm region, which is opaque even at SOFIA altitudes. PNG 093.9-00.1 was additionally observed in the 1.8-2.4μm band. Standard infrared stellar calibrators were observed for wavelength and flux calibration. A summary of all observations can be found in Table 2.

3. DATA REDUCTION Data from all three objects was reduced using REDUX, SOFIA’s facility pipeline version 1.2.0 (Clarke et al. 2015).

REDUX used the FSpextool software package, a version of the NASA Infrared Telescope Facility’s SpeX instrument data reduction software, Spextool (Cushing et al. 2004), that was specifically optimized for FLITECAM to extract, flat-field, and linearize the FLITECAM spectra (Clarke et al. 2015; Cushing et al. 2004; Vacca et al. 2004). For more detail see the FLITECAM Guest Observer (GO) Data Handbook.^1

Because SOFIA data were still subject to telluric contamination, our near-infrared (NIR) spectra needed to be corrected for atmospheric, as well as instrumental effects. FSpextool achieved this by applying the standard groundbased near-infrared (NIR) astronomy correction approach, that is by observations of a telluric standard star, generally an A0V star (Vacca et al. 2003). The corrected standard star spectra was reduced in the same manner as the science target data, then compared to a scaled Vega model to create a correction curve. In ground-based astronomy telluric standards and science targets usually have been observed at similar airmasses, but due to the unique operational aspects of airborne observations, this was not always possible on SOFIA. The effects of this airmass mismatch were removed by computing the appropriate telluric absorption model spectra for both the telluric standard and the target using the ATRAN code (Lord 1992), then re-binning the computed model spectra to match FLITECAM’s spectral resolution. The final telluric correction curve was calculated from the ratios of the telluric calibrator’s computed telluric model spectrum to the science target’s computed telluric model spectrum. This final correction curve was then applied to the science spectrum to produce a flux-calibrated, telluric corrected spectrum of the target (Vacca et al. 2015).

4. RESULTS AND DISCUSSION 4.1. Overview The 3.0 to 4.0 μm and 4.5 to 5.41 μm spectra for each object are presented in Figures 1 (BD +30 3639), 2 (IC 5117) and 3 (PNG 093.9-00.1). The difficulty of positioning the slit exactly in the same place on an extended object accounts for the slight mismatch in continuum levels from one grism observation to the next. The S/N for the 4.5–5.41 μm region was lower than the 3 μm regime due to atmospheric and thermal backgrounds, so data were smoothed using a 5 pixel wide Gaussian filter which reduced the spectral resolution to ∼700 in the 4.2-5.4 region. Atomic line emission from Hydrogen was apparent in IC 5117 and BD +30 3639, with a tentative detection of Brackett-alpha emission in PNG 093.9-00.1. Additionally, IC 5117 showed [Mg IV] emission. See Table 3.

As expected, all three objects exhibit the 3.2-3.6μm plateau, with the 3.3μm PAH complex and the 3.4 μm aliphatic complex emission evident above the 3.2 to 3.6μm plateau. In PNG 093.9-00.1 and BD +30 3639 we also clearly detected the PAH feature at 5.25 μm. Although weaker, this feature was also detected in IC 5117. The 5.7 μm feature associated with 5.25μm emission is beyond FLITECAM’s wavelength range. Before analyzing the 3.3 micron PAH feature, we smoothed the spectra with a five-pixel wide Gaussian filter and fit the Pfund-δ Hydrogen emission line at 3.296 μm, which overlaps with the peak of the expected 3.3 μm PAH feature, with a Gaussian. The Pfund-δ feature was removed using IDL’s Gaussfit routines and MPFIT (Markwardt 2009)^2. The continuum for the 3.3 and 3.4 μm features was fit using polyfit, with continuum points at 3.0 μm ± 0.025 μm and 3.8 μm ± 0.025μm. We then calculated the equivalent width and flux of each feature. Using MPFIT and a modified version of XGAUSSFIT (Lindler 2001) we fit the 3.4μm aliphatic feature with four overlapping Gaussians at 3.4, 3.46, 3.51 and 3.56 μm, as identified by Jourdain de Muizon et al. (1990). The 3.3 μm feature was fit with a Gaussian simultaneously with the 3.4 μm feature. The 3.3 and 3.4 μm results are presented in Table 4 and discussed below. The 5.25 μm feature was also fit with a Gaussian using MPFIT, with results in Table 5.

4.2. 3.3 μm Aromatic Feature

1 https://www.sofia.usra.edu/sites/default/files/USpot DCS DPS/Documents/FLITECAM GO Handbook.pdf 2 http://purl.com/net/mpfit

Peeters et al. (2004) used the full width at half maximum (FWHM), peak wavelength and overall shape of the 6.2, 7.7 and 8.6 μm PAH spectra to classify the emission into three groups. This approach (though not the definitions of the classification groups) was extended to the to the 3.3 μm and 11.2 μm bands by several groups (e.g. van Diedenhoven et al. 2004). The 3.3 μm classification scheme uses band symmetry, FWHM and central wavelength to categorize emission into three main classes, identified as Class A_{3.3}, B1_{3.3} and B2_{3.3} (van Diedenhoven et al. 2004). Class A_{3.3} exhibits symmetric emission centered at 3.290 μm with a FWHM of 0.040 μm, and is exhibited by most objects, including planetary nebulae. Class B1_{3.3} and Class B2_{3.3} exhibit asymmetric emission with a FWHM of 0.037μm. Class B1_{3.3} has a peak wavelength of 3.293μm, while Class B2_{3.3} peaks at 3.297μm (van Diedenhoven et al. 2004). Tokunaga et al. (1991) used similar criteria to categorize 3.3 μm emission, with their class 1 equivalent to van Diedenhoven’s Class A_{3.3}.

Previous studies have found little variation in the classification of 3.3 μm emission between different object classes, even though longer wavelength PAH emission can show much greater variation (Smith & McLean 2008; van Diedenhoven et al. 2004; Cohen and Barlow 2005; Peeters et al. 2002; Tokunaga et al. 1991). This may be because while the 6.2 and 7.7 μm features arise from stretching in the C–C bonds in the PAH molecules, the 3.3 and 11.2 μm features are due to stretching and out-of-plane bending modes of the C–H bonds (See Table 1, Allamandola et al. 1989b), which may lead to smaller variation in emission in the 3.3 and 11.2 μm features.

The central wavelength and FWHM of the 3.3 μm feature were calculated by modeling the continuum at 3.0 μm and 3.8 μm , and then removing the contribution of the Pfund δ Hydrogen emission line at 3.296 μm (see section 4.1). Following the original classification papers (Peeters et al. 2002; van Diedenhoven et al. 2004; Tokunaga et al. 1991) we fit a symmetric Gaussian to the 3.3μm emission feature using MPFIT (Markwardt 2009). It should be noted that the 3.3μm emission is not a Gaussian, and was only approximated with a Gaussian for consistency with past classification schemes (e.g. Peeters et al. 2002). After calculating the central wavelength and FWHM, we applied the classifications used by van Diedenhoven et al. (2004) to the 3.3 μm emission of all three PN. See Table 4. As expected, the three planetary nebulae exhibit class A_{3.3} behavior, as is consistent with previous surveys (van Diedenhoven et al. 2004; Roche et al. 1996a; Tokunaga et al. 1991).

SOFIA does not have a field de-rotator, and FLITECAM has a single fixed slit for grism observations, so this survey did not sample multiple positions across the nebulae. Therefore, this technique would not detect subtle, spatially-dependent variations in 3.3 μm emission within the nebulae. FLITECAM’s two arcsecond slit used for these observations does not sample the entirety of PNG 093.9-00.1 and BD +30 3639 or IC 5117. When slit losses are taken into account, the ground-based 3.3 μm fluxes reported in Cohen et al. (1989) are ∼70% of our 3.3 μm fluxes for BD +30 3639 and IC 5117. (See Table 4).

4.3. Aliphatic Features The 3.4μm aliphatic emission complex has been observed as a band of emission sitting on top of the 3.2-3.6μm plateau in most objects exhibiting 3.3 μm PAH emission, including HII regions (e.g. Sloan et al. 1997), proto-planetary nebulae (e.g. Hrivnak et al. 2007), external galaxies (e.g. Imanishi & Dudley 2000) and planetary nebulae (e.g. Geballe et al. 1985). The aliphatic emission feature is in general weaker than the PAH feature except in carbon-rich proto-planetary nebulae (Geballe & van der Veen 1990), where the 3.4 μm plateau can dominate the 3 μm spectrum. Kwok et al. (2001) have proposed that the apparent evolution from aliphatic-dominated to aromatic-dominated emission results from the destruction of aliphatics by the increasing UV field as objects evolve from UV weak proto-planetary nebulae to UV-hard planetary nebulae. The aliphatic band is sometimes observed as a series of individual peaks, rather than as a smooth feature above the 3.2-3.6μm plateau. Jourdain de Muizon et al. (1990) identified these bands as occurring at 3.4, 3.46, 3.51 and 3.56 μm.

All three objects in this data set do exhibit emission above the 3.2-3.6μm plateau in the 3.4 to 3.6 μm region (see Figures 1, 2 and 3). PNG 093.9-00.1 exhibited the most intense aliphatic emission in comparison with its PAH emission. Additionally, in the 3.4 to 3.6 μm region, PNG 093.9-00.1 shows evidence of the series of peaks occurring at 3.4, 3.46, 3.51 and 3.56 μm identified by Jourdain de Muizon et al. (1990). Aliphatic emission in IC 5117 and BD +30 3639 is much weaker in comparison to their PAH emission, and does not appear to exhibit the structure visible in PNG 093.9-00.1, instead appearing as a sharp rise at 3.4 μm which trails off to continuum levels at ∼ 3.6 μm. The lack of structure may be due to low S/N, rather than the emission itself. The equivalent width of this overall feature was calculated (see Table 4) and compared to the equivalent width of the aromatic 3.3 μm emission for each object. PNG 093.9-00.1 shows a higher aliphatic-to aromatic ratio than the other objects. Such a result is not unexpected as PNG 093.9-00.1 is a young object, exhibits multipolar morphology (with a binary central object), and is known to have stronger than expected 3.4 μm emission (Hsia et al. 2019; Kwok et al. 1993; Cohen et al. 1989). The PN’s high C/O ratio may also have influence on the strength of its aliphatic feature (Kholtygin 1998).

4.4. The 5.25 μm feature The 5.25 μm feature was first detected by Allamandola et al. (1989a) in KAO observations, and has been studied in a small number of objects, including HII regions and planetary nebulae. Our observations show 5.25 μm emission in all three Planetary Nebulae in our sample. While 5.25 μm emission has been reported in BD +30 3639 and PNG 093.9-00.1(Allamandola et al. 1989a; Roche et al. 1996b), it has not been measurably detected in IC 5117 prior to this work. The 5.25 μm feature was measured by smoothing with a 5-pixel Gaussian, then fitting with MPFIT (Markwardt 2009). The central wavelength, equivalent width and flux of the feature in each object is listed in Table 5.

The 5.25 μm feature is generally associated with another feature at 5.7 μm, which is beyond FLITECAM’s wavelength range. The 5.25 and 5.7 μm features preferentially arise from large, compact PAHs, rather than irregularly shaped molecules and is attributed primarily to combinations of CH stretching and CH in-plane and out-of-plane bending modes (Boersma et al. 2009).

4.5. 4.4 and 4.6 μm Deuterated PAH features Using ISO Short Wavelength Spectrometer observations of the Orion Bar and M17, Peeters et al. (2004) detected broad emission features at 4.4 and 4.6 μm which were consistent with predictions for the C–D stretching modes in deuterated aromatics and aliphatics (Bauschlicher et al. 1997; Hudgins et al. 2004). Other surveys have attempted to detect emission from deuterated PAHs (PADs) and aliphatics in the 4.4 to 4.6 μm region (Onaka et al. 2011, 2014; Doney et al. 2016), but have generally found very weak PAD emission in only a handful of HII regions. This suggests deuteration of PAHs is uncommon (Doney et al. 2016). In our data set part of the 4.4 μm PAD feature is obscured by telluric absorption (even at stratospheric altitudes), but the 4.65 μm feature is not clearly detected in any of the three sources (see Figures 1, 2 and 3). This is consistent with other investigations of PAD emissions which found them to be rare in HII regions, and indicates they may be even rarer in planetary nebulae (Doney et al. 2016).

4.6. Discussion While their appearance is very similar, the 3–5.41 μm emission in our three objects varies considerably. PNG 093.9-00.1 shows almost no emission lines, with only a potential detection in Brackett-α. BD +30 3639 and IC 5117 both show several very strong Hydrogen emission lines, and we also detect forbidden line emission from [Mg IV] in IC 5117 at 4.49μm . Infrared forbidden line emission, which has been observed in planetary nebulae at a lower spectral resolution (e.g. Hyung et al. 2001), peaks at high electron density ∼10^7cm^{−3}. The high central star temperature of IC 5117 (∼120,000; Hyung et al. 2001) may explain not only the forbidden line emission, but could also explain the relative weakness of the PAH, aliphatic and 5.25μm features. In comparison, the nebula in our sample with the lowest temperature central star (T_{ef f} ∼28,000 K; Leuenhagen & Hamann 1998), PNG 093.9-00.1, is dominated by dust emission at 3.3μm, 3.4μm, and 5.25μm. While all three PNs show PAH and aliphatic emission, PAH emission in PNG 093.9-00.1 is slightly different from IC 5117 and BD +30 3639, with a 3.3 μm central emission wavelength slightly blue-shifted from the more evolved PNs. Additionally, the shape of the PAH emission in PNG 093.9-00.1 is more asymmetric. The underlying structure of the aliphatic emission is also more apparent in PNG 093.9-00.1, with peaks at 3.4μm, 3.46μm, 3.51μm, and 3.56μm. Even the ratio of the PAH to aliphatic emission is different in this object, with the aliphatic emission in PNG 093.9-00.1 stronger in comparison to its 3.3 μm emission than the other objects. These differences may be due to the age, the temperature of the central star, or the individual morphology of the nebula, or, most likely, a combination of characteristics. A study of the spatial variations within these PNs would potentially uncover additional emission variations due to nebular conditions.

5. CONCLUSIONS Using the grism spectroscopy mode of FLITECAM aboard SOFIA, we obtained 3–5.41 μm spectra of three planetary nebulae IC 5117 and BD +30 3639 and PNG 093.9-00.1. Because SOFIA flies above 99% of Earth’s water vapor, this allowed investigation of not just the bright 3.3 μm PAH emission, but also the fainter 3.4–3.6μm aliphatic emission feature as well as the faint 5.25 μm feature. From these data the 3–5.41 μm spectrum of PNG 093.9-00.1 does show some minor variations from IC 5117 and BD +30 3639, appearing to exhibit relatively more aliphatic chemistry than the other PNs.

(1) All three objects showed PAH emission, with FWHM and central wavelength consistent with that found by Tokunaga et al. (1991), and corresponding to Class A_{3.3} emission.

(2) Aliphatic emission was observed in the 3.4–3.6 μm range of all three targets, with PNG 093.9-00.1 showing strong aliphatic emission in comparison to its aromatic (3.3 μm) emission. The observed differences may be due to morphology, central star temperature, or age, but also could be due to spatial variations within the objects. An investigation into the spatial variation of PAH and aliphatic emission in planetary nebulae could reveal important clues about PAH formation and evolution.

(3) No emission from deuterated PAHs was detected. (4) The 5.25μm feature was detected in all three objects.

ACKNOWLEDGMENTS We thank the anonymous referee for the helpful review of this paper. The authors would also like to thank the FLITECAM team and the SOFIA project for their dedication and expertise in enabling these observations. This research is based on observations made with the NASA/DLR Stratospheric Observatory for Infrared Astronomy (SOFIA). SOFIA is jointly operated by the Universities Space Research Association, Inc. (USRA), under NASA contract NNA17BF53C, and the Deutsches SOFIA Institut (DSI) under DLR contract 50 OK 0901 to the University of Stuttgart. [Financial support for this work was provided by NASA through an award issued by USRA.]

Facility: SOFIA (FLITECAM) Software: IDL, ATRAN code (Lord 1992), MPFIT (Markwardt 2009), REDUX (Clarke et al. 2015), Spextool

(Cushing et al. 2004), XGAUSSFIT (Lindler 2001)

REFERENCES Allamandola, L. J., Bregman, J. D., Sandford, S. A., et al.

1989a, ApJL, 345, L59 Allamandola, L. J., Tielens, G. G. M., and Barker, J. R.

1989b, apjs, 71, 733 Bauschlicher, C. W., Jr., Langhoff, S. R., Sandford, S. A.,

& Hudgins, D. M., 1997, J. Phys. Chem. A, 101, 2414 Bernstein, M. P., Sandford, S. A., & Allamandola, L. J.

1996, ApJL, 472, L127 Boersma, C., Mattioda, A. L., Bauschlicher, C. W., et al.

2009, ApJ, 690, 1208 Clarke, M., Vacca, W. D., & Shuping, R. Y. 2015,

Astronomical Data Analysis Software an Systems XXIV (ADASS XXIV), 355 Cohen, M., and Barlow, M. J. 2005, mnras, 362, 1199 Cohen, M., Tielens, A. G. G. M., Bregman, J., Witteborn,

F. C., Rank, D. M., Allamandola, L. J., Wooden, D., and Jourdain de Muizon, M. 1989, apj, 341, 246 Cushing, M. C., Vacca, W. D., & Rayner, J. T. 2004,

PASP, 116, 362 Doney, K. D., Candian, A., Mori, T., et al. 2016, A&A,

586, A65 Duley, W. W., & Williams, D. A. 1981, MNRAS, 196, 269 Dunham, E. W., Bida, T. A., Collins, P. L., et al. 2014,

Proc. SPIE, 91470H

Dunham, E. W., Elliot, J. L., Bida, T. A., et al. 2004, Proc. SPIE, 592 Geballe, T. R., Lacy, J. H., Persson, S. E., McGregor, P. J., and Soifer, B. T. 1985, apj, 292, 500 Geballe, T. R., & van der Veen, W. E. C. J. 1990, A&A, 235, L9 Gillett, F. C., Forrest, W. J., Merrill, K. M., Soifer, B. T., and Capps, R. W. 1975, apj, 200, 609 Heller, R., Jacob, R., Schönberner, D., et al. 2018, A&A, 620, A98 Hora, J. L., Latter, W. B., Allen, L. E., et al. 2004, ApJS, 154, 296 Hsia, C.-H., Zhang, Y., Kwok, S., et al. 2019, Ap&SS, 364, 32 Hudgins, D. M., Bauschlicher, C. W., & Sandford, S. A.

2004, ApJ, 614, 770 Hrivnak, B.J., Geballe, T.R., and Kwok, S. 2007, apj, 662, 1059 Hyung, S., Aller, L. H., Feibelman, W. A., et al. 2001, ApJ, 563, 889 Imanishi, M., & Dudley, C. C. 2000, ApJ, 545, 701 Joblin, C., Tielens, A. G. G. M., Allamandola, L. J., et al.

1996, ApJ, 458, 610 Jourdain de Muizon, M., Cox, P., and Lequeux, J. 1990, aaps, 83, 337

Kholtygin, A. F. 1998, aap, 329, 691 Kwok, S. 1985, AJ, 90, 49 Kwok, S., Hrivnak, B. J., & Langill, P. P. 1993, ApJ, 408, 586 Kwok, S. 1994, PASP, 106, 344 Kwok, S., Volk, K., & Bernath, P. 2001, ApJL, 554, L87 Leger, A., and Puget, J. L. 1984, aap, 137, L5 Leuenhagen, U., Hamann, W.-R., & Jeffery, C. S. 1996, A&A, 312, 167 Leuenhagen, U., & Hamann, W.-R. 1998, A&A, 330, 265 Lindler, D. 2001, User’s Guide Logsdon, S. E., McLean, I. S., Becklin, E. E., et al. 2016, Proc. SPIE, 99080B Logsdon, S. E., McLean, I. S., Becklin, E. E., et al. 2014, Proc. SPIE, 91472Y Lord, S. D. 1992, NASA TM103957 Mainzer, A. K., and McLean, I. S. 2003, apj, 597, 555 Maltseva, E., Mackie, C. J., Candian, A., et al. 2018, A&A, 610, A65 Markwardt, C. B. 2009, Astronomical Data Analysis Software and Systems XVIII, 411, 251 McLean, I. S., Smith, E. C., Aliado, T., Brims, G., Kress, E., Magnone, K., Milburn, J., Oldag, A., Silvers, T., and Skulason, G. 2006, procspie, 6269.

Meixner, M., Skinner, C. J., Temi, P., et al. 1993, ApJ, 411, 266 Onaka, T., Sakon, I., Ohsawa, R., et al. 2011, EAS Publications Series, 55 Onaka, T., Mori, T. I., Sakon, I., et al. 2014, ApJ, 780, 114 Peeters, E., Hony, S., Van Kerckhoven, C., Tielens, A. G.

G. M., Allamandola, L. J., Hudgins, D. M., and Bauschlicher, C. W. 2002, aap, 390, 1089

Peeters, E., Allamandola, L. J., Bauschlicher, C. W., et al.

2004, ApJ, 604, 252 Roche, P. F., Lucas, P. W., Hoare, M. G., Aitken, D. K., and Smith, C. H. 1996a, mnras, 280, 924 Roche, P. F., Lucas, P. W., & Geballe, T. R. 1996b, MNRAS, 281, L25 Sahai, R., Morris, M. R., & Villar, G. G. 2011, AJ, 141, 134 Sellgren, K. 1984, apj, 277, 623 Shibata, K. M., Tamura, S., Deguchi, S., et al. 1989, ApJL, 345, L55 Sloan, G. C., Bregman, J.D., Geballe, T.R., Allamandola, L.J., and Woodward, C. E. 1997, apj, 474, 735 Smith, E. C., and McLean, I. S. 2006, procspie, 6269, 50 Smith, E. C. D., & McLean, I. S. 2008, ApJ, 676, 408 Smith, E. C., Miles, J. W., Helton, L. A., et al. 2014, Proc. SPIE, 914706 Tokunaga, A. T., Sellgren, K., Smith, R. G., Nagata, T., Sakata, A., and Nakada, Y. 1991, apj, 380, 452 Vacca, W. D., Cushing, M. C., & Rayner, J. T. 2003, PASP, 115, 389 Vacca, W. D., Cushing, M. C., & Rayner, J. T. 2004, PASP, 116, 352 Vacca, W. D., Hamilton, R. T., Savage, M., et al. 2015, ApJ, 804, 66 van Diedenhoven, B., Peeters, E., Van Kerckhoven, C., Hony, S., Hudgins, D. M., Allamandola, L. J., and Tielens, A. G. G. M. 2004, apj, 611, 928 Waddell, P. G., & Davidson, J. A. 2002, Proc. SPIE, 77 Weidmann, W. A., & Gamen, R. 2011, A&A, 526, A6 Yang, X. J., Glaser, R., Li, A., et al. 2017, NewAR, 77, 1

Table 1. FLITECAM GRISM MODE SUMMARY

Grism Lines/mm Order OSF Lambda start Lambda central Lambda end Measured R

(μm) (μm) (μm) A 162.75 1 LM 4.395 4.96 5.533 1680 A 162.75 2 Klong 2.216 2.5 2.784 1690 A 162.75 3 Hwide 1.497 1.69 1.877 1710 B 217 1 LM 3.307 3.73 4.16 1780 B 217 2 Hwide 1.649 1.86 2.076 1750 B 217 3 J 1.14 1.28 1.424 1720 C 130.2 2 LM 2.756 3.11 3.467 1670 C 130.2 3 Kwide 1.872 2.11 2.346 1650 C 130.2 4 H 1.445 1.62 1.801 1640 Note—See Logsdon et al. (2016) and Smith and McLean (2006) for more detail. Resolution measured for 2 arcsecond slit. LMA resolution determined from in-flight observations, other spectral resolutions determined at Lick Observatory.

Table 2. TARGET LIST AND OBSERVING LOG

Object Spectral T_{ef f} Size (FWHM) Obs 3-3.4 μm 3.4-4.1 μm 4.4-5.41 μm

Name Type (K) (arcsec) Date time (s) time (s) time (s) BD +30 3639 [WC9] 47000 5.15 2016 Oct 14 360 360 900 IC 5117 [WR] 120000 2.95 20016 Oct 19 960 1440 960 PNG093.9−00.1 [WC11] 28000 3.96 2016 Oct 20 480 720 600 Note—spectral types from Weidmann & Gamen (2011); T_{ef f} from: BD +303639: Leuenhagen et al. (1996), IC 5117: Hyung et al.( 2001), PNG093.9−00.1: Leuenhagen & Hamann(1998); Angular Size from FLITECAM K-band images

Table 3. ATOMIC LINE EMISSION

Object Pfund-ϵ Flux Pfund-δ Flux Pfund-γ Flux Brackett-α Flux Pfund-β Flux

Name (10^{−15}W/m^2) (10^{−15}W/m^2) (10^{−15}W/m^2) (10^{−15}W/m^2) (10^{−15}W/m^2) BD +30 3639 2.50±0.05 5.1±0.3 5.64±0.04 41.53±0.04 6.26±0.31 IC 5117 0.25±0.09 0.56±0.2 0.75±0.01 4.76±0.01 1.17±0.21 PNG 093.9−00.1 - - - 0.32±0.05 - Note—IC 5117 also showed emission in [Mg IV], with a flux of 4.1±0.18(10^{− 15}W/m^2) Flux has been corrected for slit loss assuming the angular size in Table 2 and a 2 arcsecond FLITECAM slit. Extraction width (arcsec): BD: 8.2 (3-3.35μm), 8.4 (3.35-4.1μm), 20.1 (4.2-5.41μm); IC: 4.3 (3-3.35μm), 3.7 (3.35- 4.1μm), 10.0 (4.2-5.41μm);PNG: 6.1 (3-3.35μm), 5.8 (3.35-4.1μm), 5.4 (4.2-5.41μm)

Table 4. PAH AND ALIPHATIC RESULTS

Object 3.3μm Peak 3.3μm FWHM 3.3μm 3.3μm EW Aliphatic EW Ratio 3.3μm Flux

Name (μm) (μm) Class (μm) (μm) 3.4/PAH (10^{−15}W/m^2) BD +30 3639 3.292±0.002 0.042±0.002 A 0.204±0.005 0.049±0.003 0.240 88.3±0.07 IC 5117 3.292±0.004 0.041±0.002 A 0.096±0.007 0.027±0.005 0.281 11.9±0.06 PNG 093.9−00.1 3.290±0.002 0.044±0.003 A 0.302±0.002 0.142±0.002 0.470 39.3±0.02 Note— Flux has been corrected for slit loss assuming the angular size in Table 2 and a 2 arcsecond FLITECAM slit. Extraction width (arcsec): BD: 8.2 (3-3.35μm), 8.4 (3.35-4.1μm); IC: 4.3 (3-3.35μm), 3.7 (3.35-4.1μm); PNG: 6.1 (3-3.35μm), 5.8 (3.35-4.1μm). Cohen et al. reported 3.3 μm fluxes for of 62.8(10^{− 15}W/m^2) for BD+30 3639 and 8.59(10^{− 15}W/m^2) for IC 5117

Table 5. 5.25 MICRON RESULTS

Object Extraction 5.25μm Peak 5.25μm FWHM 5.25μm EW 5.25μm Flux Name Width(arcsec) (μm) (μm) (μm) (10^{−15}W/m^2) BD+30 3639 20.1 5.265±0.01 0.12±0.05 0.06±0.01 23.6±2.7 IC 5117 10.0 5.269±0.02 0.09±0.05 0.05±0.03 3.6±0.9 PNG 093.9−00.1 5.4 5.267±0.01 0.15±0.03 0.16±0.01 23.8±0.5 Note—Flux has been corrected for slit loss assuming the angular size in Table 2 and a 2 arcsecond FLITECAM slit.

Figure 1. Spectrum of BD +30 3639 obtained by SOFIA/FLITECAM with a spectral resolution ∼1300 from 3 to 4.1μm and ∼700 from 4.2 to 5.4μm. PAH, Aliphatic and Atomic emission features are labeled. Calculated emission fits are in red. .

Figure 2. Spectrum of IC 5117 obtained by SOFIA/FLITECAM with a spectral resolution ∼1300 from 3 to 4.1μm and ∼700 from 4.2 to 5.4μm. PAH, Aliphatic and Atomic emission features are labeled. Calculated emission fits are in red. .

Figure 3. Spectrum of PNG 093.9-00.1 obtained by SOFIA/FLITECAM with a spectral resolution ∼1300 from 3 to 4.1μm and ∼700 from 4.2 to 5.4μm. PAH and Aliphatic features are labeled. Calculated emission fits are in red. .