arXiv:2201.03216v1 [nucl-th] 10 Jan 2022

Nuclear mass table in deformed relativistic Hartree-Bogoliubov theory in continuum: I. even-even nuclei

Kaiyuan Zhang,^1 Myung-Ki Cheoun,^2 Yong-Beom Choi,^3 Pooi Seong Chong,^4 Jianmin Dong,^{5, 6} Zihao Dong,^1 Xiaokai Du,^1 Lisheng Geng,^{7, 8} Eunja Ha,^9 Xiao-Tao He,^{10} Chan Heo,^4 Meng Chit Ho,^4 Eun Jin In,^{11, 12} Seonghyun Kim,^2 Youngman Kim,^{13} Chang-Hwan Lee,^3 Jenny Lee,^4 Hexuan Li,^1 Zhipan Li,^{14} Tianpeng Luo,^1 Jie Meng,^{1, ∗} Myeong-Hwan Mun,^{2, 15} Zhongming Niu,^{16} Cong Pan,^1 Panagiota Papakonstantinou,^{13} Xinle Shang,^{5, 6} Caiwan Shen,^{17} Guofang Shen,^7 Wei Sun,^{14} Xiang-Xiang Sun,^{18, 19} Chi Kin Tam,^4 Thaivayongnou,^7 Chen Wang,^{10} Xingzhi Wang,^1 Sau Hei Wong,^4 Jiawei Wu,^{10} Xinhui Wu,^1 Xuewei Xia,^{20} Yijun Yan,^{5, 6} Ryan Wai-Yen Yeung,^4 To Chung Yiu,^4 Shuangquan Zhang,^1 Wei Zhang,^8 Xiaoyan Zhang,^{16} Qiang Zhao,^{11, 1} and Shan-Gui Zhou^{19, 21, 22, 23}

(DRHBc Mass Table Collaboration) 1State Key Laboratory of Nuclear Physics and Technology, School of Physics, Peking University, Beijing 100871, China 2Department of Physics and Origin of Matter and Evolution of Galaxy (OMEG) Institute, Soongsil University, Seoul 156-743, Korea 3Department of Physics, Pusan National University, Busan 46241, Korea 4Department of Physics, The University of Hong Kong, Pokfulam 999077, Hong Kong, China 5Institute of Modern Physics, Chinese Academy of Sciences, Lanzhou 730000, China 6School of Physics, University of Chinese Academy of Sciences, Beijing 100049, China 7School of Physics, Beihang University, Beijing 102206, China 8School of Physics and Microelectronics, Zhengzhou University, Zhengzhou 450001, China 9Department of General Education for Human Creativity, Hoseo University, Asan, Chungnam 336-851, Korea 10College of Materials Science and Technology, Nanjing University of Aeronautics and Astronautics, Nanjing 210016, China 11Center for Exotic Nuclei Studies, Institute for Basic Science, Daejeon 34126, Korea

12Department of Energy Science, Sungkyunkwan University, Suwon 16419, Korea 13Rare Isotope Science Project, Institute for Basic Science, Daejeon 34000, Korea 14School of Physical Science and Technology, Southwest University, Chongqing 400715, China 15Korea Institute of Science and Technology Information, Daejeon 34141, Korea 16School of Physics and Optoelectronics Engineering, Anhui University, Hefei 230601, China 17School of Science, Huzhou University, Huzhou 313000, China 18School of Nuclear Science and Technology, University of Chinese Academy of Sciences, Beijing 100049, China 19CAS Key Laboratory of Theoretical Physics, Institute of Theoretical Physics, Chinese Academy of Sciences, Beijing 100190, China 20School of Physics and Electronic Engineering, Center for Computational Sciences, Sichuan Normal University, Chengdu 610068, China 21School of Physical Sciences, University of Chinese Academy of Sciences, Beijing 100049, China 22Center of Theoretical Nuclear Physics, National Laboratory of Heavy Ion Accelerator, Lanzhou 730000, China 23Synergetic Innovation Center for Quantum Effects and Application, Hunan Normal University, Changsha 410081, China (Dated: January 11, 2022)

Abstract

Ground-state properties of even-even nuclei with 8 ≤ Z ≤ 120 from the proton drip line to the neutron drip line have been investigated using the deformed relativistic Hartree-Bogoliubov theory in continuum (DRHBc) with the density functional PC-PK1. With the effects of deformation and continuum included simultaneously, 2583 even-even nuclei are predicted to be bound. The calculated binding energies, two-nucleon separation energies, root-mean-square (rms) radii of neutron, proton, matter, and charge distributions, quadrupole deformations, and neutron and proton Fermi surfaces are tabulated and compared with available experimental data. The rms deviation from the 637 mass data is 1.518 MeV, providing one of the best microscopic descriptions for nuclear masses. The drip lines obtained from DRHBc calculations are compared with other calculations, including the spherical relativistic continuum Hartree-Bogoliubov (RCHB) and triaxial relativistic Hartree-Bogoliubov (TRHB) calculations with PC-PK1. The deformation and continuum effects on the limits of the nuclear landscape are discussed. Possible peninsulas consisting of bound nuclei beyond the two-neutron drip line are predicted. The systematics of the two-nucleon separation energies, two-nucleon gaps, rms radii, quadrupole deformations, potential energy curves, neutron densities, neutron mean-field potentials, and pairing energies in the DRHBc calculations are also discussed. In addition, the α decay energies extracted are in good agreement with available data.

∗Electronic address: mengj@pku.edu.cn

Contents

I. Introduction 5

II. Theoretical framework 8

III. Numerical details 9

IV. Results and Discussion 10 A. Overview of nuclear masses and two-nucleon separation energies 10 1. Nuclear masses 10 2. Two-nucleon separation energies 12 3. Comparison with other predictions 14 B. The limits of the nuclear landscape 16 C. Two-nucleon gaps and possible magic numbers 18 D. Rms radii 20 1. Charge radii 20 2. Neutron radii 21 E. Quadrupole deformation and potential energy curves 22 1. Quadrupole deformation 22 2. Evolutions of potential energy curves 24 F. Neutron density distributions 26 G. Neutron potential and diffuseness 27 H. Pairing energies 28 I. Alpha decay energies 30

V. Summary 31

Acknowledgments 34

Explanation of Tables 35

References 212

I. INTRODUCTION

The new generations of radioactive ion beam (RIB) facilities running and under construction worldwide, including the Cooler Storage Ring (CSR) at the Heavy Ion Research Facility in Lanzhou (HIRFL) in China [1], the Radioactive Ion Beam Factory (RIBF) at RIKEN in Japan [2], the Rare isotope Accelerator complex for ON-line experiments (RAON) in Korea [3], the Facility for Antiproton and Ion Research (FAIR) in Germany [4], the Second Generation System On-Line Production of Radioactive Ions (SPIRAL2) at GANIL in France [5], the Facility for Rare Isotope Beams (FRIB) in the USA [6], etc. produce and study more and more nuclei far from the stability valley and, thus, continue to extend our knowledge of nuclear physics from stable nuclei to exotic ones [7], which also leads to new insights into the origins of the chemical elements in stars and star explosions [8, 9].

Up to date, the existence of more than 3300 nuclides has been confirmed [10, 11] and the masses of about 2500 among them have been measured [12–14]. Accurate nuclear masses [15, 16] are of crucial importance not only in nuclear physics but also in other fields, such as particle physics, nuclear astrophysics, and neutrino physics. However, most of neutronrich nuclei far from the stability valley will remain beyond the experimental access in the foreseeable future. For example, the proton drip line of neptunium (Z = 93) has been reached [17], but the neutron drip line is known only up to neon (Z = 10) [18]. Therefore, a reliable theoretical nuclear mass table is highly desired to further understand the nuclear landscape.

Lots of efforts have been made to predict nuclear masses and to explore great unknowns of the nuclear landscape [19]. Precise descriptions of nuclear masses have been achieved with various macroscopic-microscopic models [20–23], among which the WS4 model fits its 18 parameters to 2353 available mass data and achieves the highest accuracy, 0.298 MeV [22]. A number of Skyrme [24–29] or Gogny [30–32] Hartree-Fock-Bogoliubov (HFB) mass-table-type calculations have been performed based on the non-relativistic density functional theory. The Skyrme mass model HFB-27* [29] determines its 24 parameters in functionals and corrections by fitting 2353 nuclear masses, and achieves an accuracy of 0.512 MeV. The Gogny mass model D1M [31] includes the beyond-mean-field correlation energies and fits its 14 parameters to 2149 measured masses, and the final rms deviation is 0.798 MeV.

The covariant density functional theory (CDFT) has proven to be a powerful theory in nuclear physics which has been used to describe successfully a variety of nuclear phenomena [33–41]. The CDFT has gained wide attention in recent years for many attractive advantages, such as the automatic inclusion of the nucleonic spin degree of freedom and the spin-orbital interaction [42], the explanation of the pseudospin symmetry in nucleon spectrum [43–48] and the spin symmetry in anti-nucleon spectrum [48–50], and the natural inclusion of the nuclear magnetism [51], which plays an important role in nuclear magnetic moments [52–56] and nuclear rotations [37, 57–68].

Significant progresses on mass description have also been made based on the CDFT [37, 69–78]. The relativistic mean field (RMF) calculations including dynamical correlation energies describe the masses of 575 even-even nuclei with an accuracy of 1.14 MeV [75], based on the density functional PC-PK1 which has only 9 parameters in its Lagrangian and 2 ones for the pairing strength adjusted to the masses of 60 spherical nuclei [79].

It is worth mentioning that the shell model and its generalizations can also be used to predict nuclear masses and other properties [80–82]. The shell model strictly fulfills all conservation laws, accounts not only for pairing but for many possible residual interactions, and achieves success in correctly predicting the neutron drip line of oxygen isotopes [83, 84], etc. Due to the computational demand, however, it is not realistic to apply the shell model to describe all the nuclei in the whole nuclear chart.

Based on the CDFT and with the pairing correlations and continuum effects properly treated, the relativistic continuum Hartree-Bogoliubov (RCHB) theory was developed in Refs. [85, 86] with the relativistic Hartree-Bogoliubov (RHB) equations solved in coordinate space. The RCHB theory has achieved great successes in the studies of both stable and exotic nuclei [44, 45, 85, 87–95]. Based on the RCHB theory and the density functional PC-PK1, the first nuclear mass table including continuum effects has been constructed and the continuum effects on the limits of the nuclear landscape have been discussed [77]. It is demonstrated that the continuum effects are crucial for drip-line locations and 9035 nuclei with 8 ≤ Z ≤ 120 are predicted to be bound, which remarkably extends the existing nuclear landscapes.

Except for doubly-magic nuclei, most nuclei in the nuclear chart deviate from the spherical shape. Solving the deformed RHB equations in coordinate space is extremely difficult if not impossible [96]. To provide a proper description of deformed exotic nuclei, the deformed relativistic Hartree-Bogoliubov theory in continuum (DRHBc) was developed [97, 98], with the deformed RHB equations solved in a Dirac Woods-Saxon basis [99]. The DRHBc theory has been extended to the version with density-dependent meson-nucleon couplings [100], to incorporate the blocking effects of odd nucleon(s) [101], and to explore the rotational excitations of exotic nuclei with the angular momentum projection [102, 103]. Inheriting the advantages of the RCHB theory and including the deformation degrees of freedom, the DRHBc theory was successful in studying deformed halos in magnesium isotopes and predicting an interesting shape decoupling between the core and the halo in^{42,44}Mg [97, 98], resolving the puzzles concerning the radius and configuration of valence neutrons in^{22}C [104], investigating the shell evolution of carbon isotopes and neutron halos in^{15,19,22}C [105], exploring particles in the classically forbidden regions for magnesium isotopes [106], and interpreting the neutron halos in^{17}B [107] and^{19}B [108].

The success of the RCHB mass table in extending the limit of nuclear existence and the advantage of the DRHBc theory for deformed nuclei stimulate the construction of an upgraded mass table including simultaneously the deformation and continuum effects by the DRHBc theory. However, the DRHBc theory is numerically much more complicated than the RCHB theory. Note that all the above mentioned DRHBc calculations focused upon light nuclei only [97, 98, 100, 101, 104–108].

In order to provide a unified description for all nuclei in the nuclear chart with the DRHBc theory, a DRHBc Mass Table Collaboration was established. The strategy and techniques for the nuclear mass table by the DRHBc theory with point-coupling density functionals are presented in Ref. [109]. During the construction of the DRHBc mass table, several important and interesting results have been reported [110–114]. In Ref. [110], the dependence on the Legendre expansion of nuclear potentials and densities is investigated for light and heavy nuclei. By comparing the neutron drip lines predicted by the DRHBc theory and the RCHB theory, the deformation effects on the location of neutron drip line have been studied from O to Ca isotopes in Ref. [111]. The predictive power of the DRHBc theory with PC-PK1 for the masses of superheavy nuclei has been shown by comparing with the latest AME2020 data, and an interesting peninsula consisting of bound superheavy nuclei beyond the twoneutron drip line has been predicted [112]. Similar peninsulas of stability have been found in the region of medium heavy nuclei [113], and the effects of higher order deformations such as β_4 and β_6 on this phenomenon have been investigated [114].

In this paper, we report the DRHBc mass table for even-even nuclei with 8 ≤ Z ≤ 120.

The DRHBc theoretical framework is presented briefly in Sec. II. Numerical details in the construction of the DRHBc mass table for even-even nuclei are given in Sec. III. Extensive results are compiled in Sec. IV, including binding energies, two-nucleon separation energies, rms radii, quadrupole deformations, etc. Finally, a summary is given in Sec. V.

II. THEORETICAL FRAMEWORK

The details of the DRHBc theory with meson-exchange and point-coupling density functionals can be found in Refs. [98] and [109], respectively. In the following we introduce its theoretical framework briefly.

Starting from the Lagrangian density for point-coupling functionals, the energy density functional of the nuclear system can be constructed under the mean-field and no-sea approximations. By minimizing the energy density functional with respect to the densities, one obtains the Dirac equation for nucleons within the relativistic mean-field framework [40]. Treating self-consistently the mean field and pairing correlations, the RHB equations for the nucleons read [115] h^D − λ^τ Δ −Δ^∗ −h^∗_D + λ_τ U^k V_k = E_k U^k V_k . (1)

For exotic nuclei with the Fermi energy very close to the continuum threshold, the pairing interaction can scatter nucleons from bound states to resonant ones in the continuum. The density could become more diffuse due to this coupling to the continuum, and the position of the drip line might be influenced, which are the so-called continuum effects. In order to consider such continuum effects, the deformed RHB equations in the DRHBc theory are solved in a Dirac Woods-Saxon basis, in which the radial wave functions have a proper asymptotic behavior for large r [99].

In Eq. (1), λ_τ is the Fermi energy (τ = n/p for neutrons or protons), E_k and (U_k, V_k)^T the quasiparticle energy and wave function, and h_D the Dirac Hamiltonian,

h_D(r) = α · p + V (r) + β[M + S(r)], (2)

with the scalar S(r) and vector V (r) potentials. The pairing potential Δ reads

Δ(r_1, r_2) = V^{pp}(r_1, r_2)κ(r_1, r_2), (3) with a density-dependent force of zero range,

V^{pp}(r_1, r_2) = V_0 1 2 (1 − P^σ)δ(r_1 − r_2) ( 1 − ρ(r_1) ρ_{sat} ) , (4)

and the pairing tensor κ [116].

For axially deformed nuclei, the potentials and densities are expanded in terms of the Legendre polynomials, f(r) = ∑ λ f_λ(r)P_λ(cos θ), λ = 0, 2, 4, · · · , (5)

where λ is restricted to be even numbers due to spatial reflection symmetry.

Under the mean-field approximation, many-body correlations are taken into account with the symmetry breaking, e.g., the loss of translational invariance and rotational invariance [116]. The deformed state thus obtained does not have a good angular momentum quantum number, and should be regarded as the intrinsic ground state. One can restore the broken symmetries by using beyond-mean-field techniques such as the angular momentum projection and the generator coordinate method. In the present DRHBc theory, beyondmean-field correlations are taken into account by the microscopic calculation of center-of-mass and rotational correction energies, and the details can be found in Ref. [109].

III. NUMERICAL DETAILS

In Ref. [109], systematic numerical convergence checks from light to heavy nuclei for the DRHBc calculations have been performed, and numerical details for the DRHBc mass table of even-even nuclei have been suggested. Numerical details used in the present study are almost the same as those suggested.

In the following we summarize the numerical details in the present DRHBc mass table for even-even nuclei.

• The density functional PC-PK1 [79], which provides one of the best density-functional descriptions for nuclear masses [72, 75, 112, 117], is employed.

• The pairing strength V_0 = −325 MeV fm^3 and the saturation density ρ_{sat} = 0.152 fm^{−3} in Eq. (4) together with a pairing window of 100 MeV, which reproduce well the oddeven mass differences for calcium and lead isotopes [109].

• The energy cutoff for the Dirac Woods-Saxon basis E^+_{cut} = 300 MeV, which guarantees the convergence accuracy of 0.01 MeV for the total energies of doubly magic nuclei 40Ca,^{100}Sn, and^{208}Pb, reproducing exactly the results from RCHB calculations [109].

• The angular momentum cutoff for the Dirac Woods-Saxon basis J_{max} =^{23}_2 ℏ, which guarantees the convergence accuracy of 0.01% for the total energy of the deformed heavy nucleus^{300}Th [109].

• The number of the Dirac Woods-Saxon basis states in the Dirac sea is the same as that in the Fermi sea [97–99].

• The Legendre expansion truncations in Eq. (5) are chosen as λ_{max} = 6 and 8 for nuclei with 8 ≤ Z ≤ 70 and 72 ≤ Z ≤ 100, respectively. This guarantees the convergence accuracy of 0.03% for the total energies of^{20}Ne and^{112}Mo and of 0.01% for the total energy of^{300}Th, when their deformations are constrained to be β_2 = 0.6 [109]. For superheavy nuclei with 102 ≤ Z ≤ 120, λ_{max} = 10 is adopted [110].

IV. RESULTS AND DISCUSSION

A. Overview of nuclear masses and two-nucleon separation energies

1. Nuclear masses

We perform systematic calculations for all even-even nuclei from Z = 8 to Z = 120 from the proton drip line to the neutron drip line. In Table II, the ground-state properties of these nuclei are summarized. The mass number A, neutron number N, binding energy E^{cal}_b , binding energy including rotational correction E^{cal}_{b+rot}, neutron rms radius R_n, proton rms radius R_p, matter rms radius R_m, charge radius R_{ch}, neutron quadrupole deformation β_{2n}, proton quadrupole deformation β_{2p}, total quadrupole deformation β_2, neutron Fermi surface λ_n, and proton Fermi surface λ_p are listed. The two-neutron separation energy S_{2n} and the two-proton separation energy S_{2p} for each nucleus are also provided. The available experimental binding energies [14] and charge radii [118, 119] are shown for comparison. 2583 even-even nuclei from O (Z = 8) to Z = 120 are predicted to be bound by the DRHBc theory with the relativistic density functional PC-PK1. For guidance, some unbound nuclei

FIG. 1: (Color online) 2583 bound even-even nuclei from O (Z = 8) to Z = 120 predicted by the DRHBc theory with PC-PK1. For the 637 even-even nuclei with mass measured, the binding energy differences between the data [14] and the DRHBc calculations (with rotational correction energy included) are scaled by colors. The nucleon drip lines predicted by different mass tables, RCHB with PC-PK1 [77], RHB with PC-PK1 [78] and with NL3* [73], HFB with UNEDF1 [27], RMF+BCS with TMA [70], FRDM(2012) [20], and WS4 [22], are plotted for comparison.

are listed and underlined in Table II as well.

In Fig. 1, the nuclear landscape for even-even nuclei from O (Z = 8) to Z = 120 explored by the DRHBc theory with PC-PK1 is shown, where the squares represent bound nuclei. Among these 2583 bound even-even nuclei, the masses of 637 nuclei have been measured experimentally [14]. The binding energy differences E^{exp}_b − E^{cal}_{b+rot} for these measured nuclei scaled by colors are plotted. It is found that the overall agreement between experimental and calculated binding energies is quite good, and the rms deviation for these 637 nuclei is σ = 1.518 MeV.

2. Two-nucleon separation energies

The two-neutron separation energy S_{2n} and the two-proton separation energy S_{2p} are respectively defined as

S_{2n}(Z, N) = E_b(Z, N) − E_b(Z, N − 2), (6) S_{2p}(Z, N) = E_b(Z, N) − E_b(Z − 2, N), (7)

where E_b(Z, N) is the binding energy of the nucleus with the proton number Z and the neutron number N. These quantities provide information on whether one nucleus is stable against two-nucleon emissions, and thus define the two-nucleon drip lines. In this work, a nucleus is bound only if its two-nucleon and multi-nucleon separation energies are positive, i.e., it is stable against two- and multi-nucleon emissions. For each isotopic chain, the location where S_{2n} = 0 or S_{2p} = 0 defines the two-neutron drip line or the two-proton drip line. Because this paper concerns only even-even nuclei, in the following we refer to the two-nucleon drip line as the nucleon drip line, unless otherwise specified.

FIG. 2: (Color online) Two-neutron separation energies of bound even-even nuclei with 8 ≤ Z ≤ 120 in the DRHBc calculations with PC-PK1 scaled by colors.

In Fig. 2, the two-neutron separation energies S_{2n} of the bound even-even nuclei predicted by the DRHBc theory with PC-PK1 are shown. From a global view, S_{2n} is large near the proton drip line and close to zero near the neutron drip line. For a given isotopic (isotonic) chain, S_{2n} decreases (increases) with the increasing neutron (proton) number. There are 41 nuclei with the predicted two-neutron separation energies larger than 30 MeV, and most of them are located at the proton-rich side of nuclear landscape with Z ≤ 50. There are 103 nuclei with S_{2n} in the range of 21-30 MeV, mainly located in the proton-rich region of the nuclear chart; 501 nuclei with S_{2n} in the range of 12-21 MeV, most of which are near the valley of stability; 1168 nuclei with S_{2n} in the range of 3-12 MeV which lie on the neutronrich region mostly. In addition, there are 770 nuclei with S_{2n} less than 3 MeV, and most of them are located in the region far from the stability line, and are even approaching the neutron drip line.

It should be noted that, there are 253 weakly bound nuclei with S_{2n} ≤ 1 MeV in the DRHBc calculations. They are extremely neutron-rich, and many of them lie even beyond the neutron drip lines predicted by the other nuclear mass models. For these weakly bound nuclei, as the neutron Fermi surface is close to the continuum threshold, pairing correlations could scatter the nucleons from bound states to resonant ones in the continuum and, thus, provide a significant coupling between the continuum and bound states, which might affect the location of the drip line [77]. In addition, the nearly vanishing S_{2n} around the neutron drip line might be regarded as a sign of the neutron halo or giant halo [35], which requires a detailed analysis of neutron radii and single-particle levels.

The two-neutron separation energy S_{2n} is a widely used probe of the neutron shell structure. In general, for a given isotopic chain, S_{2n} decreases smoothly with the neutron number, except at a magic number where S_{2n} drops significantly. An abrupt decline of S_{2n} indicates the occurrence of neutron shell closure. It can be seen in Fig. 2 that the significant drops exist at the traditional magic numbers N = 20, 28, 50, 82, and 126, which demonstrates that these shell closures are well reproduced by the DRHBc theory. Apart from this, dramatic declines of S_{2n} can be found at N = 184 and 258, which indicates that the neutron numbers 184 and 258 may be neutron magic numbers in the superheavy mass region [92, 120].

The two-proton separation energies S_{2p} of the bound even-even nuclei predicted by the DRHBc theory with PC-PK1 are scaled by colors in Fig. 3. S_{2p} increases with the neutron number for a given isotopic chain, while decreases with the proton number for a given isotonic chain. In the present study, there are 232 nuclei with S_{2p} ≥ 40 MeV located near the neutron drip line, 611 neutron-rich nuclei with 30 MeV ≤ S_{2p} < 40 MeV, 754 nuclei with 20 MeV ≤ S_{2p} < 30 MeV near the β-stability line, 566 nuclei with 10 MeV ≤ S_{2p} < 20 MeV, and 420 nuclei with S_{2p} < 10 MeV near the proton drip line. 16 nuclei have S_{2p} ≤ 1 MeV, which

FIG. 3: (Color online) Two-proton separation energies of bound even-even nuclei with 8 ≤ Z ≤ 120 in the DRHBc calculations with PC-PK1 scaled by colors.

is much less than the number of the nuclei with S_{2n} ≤ 1 MeV. This is consistent with the fact that the number of halo nuclei observed on the proton-rich side is much less than that on the neutron-rich side, due to the existence of the Coulomb barrier. Moreover, although the proton Fermi surface is approaching zero for neutron-deficient nuclei, the contributions from the continuum are suppressed due to the Coulomb barrier in comparison with that for the neutron-rich nuclei. This also partially explains why the proton drip lines predicted by different models are very close. At the proton magic numbers 20, 28, 50, and 82, some abrupt changes of S_{2p} are exhibited, which indicates that the DRHBc theory reproduces the traditional proton closed shells. The closed shells will be discussed further down in terms of two-nucleon gaps.

3. Comparison with other predictions

For a quantitative comparison with previous works, the rms deviations of binding energies σ(E_b), two-neutron separation energies σ(S_{2n}), and two-proton separation energies σ(S_{2p}) for the present calculations with respect to the data available from AME2020 [14] are listed in Table I, together with some previous density functional calculations. Because the number of bound nuclei may differ by models, the data numbers for extracting the rms deviations are also listed in Table I. It is seen that the accuracy of the DRHBc calculations with

TABLE I: The rms deviations of binding energies, of two-neutron separation energies, and of twoproton separation energies for the DRHBc calculations with PC-PK1 with respect to the AME2020 data [14] in the unit of MeV. The results of other relativistic and non-relativistic density functional calculations are also listed for comparison.

Model Symmetry Density functional σ(E_b) σ(S_{2n}) σ(S_{2p}) Data numbers Reference DRHBc^{w/o Erot} Axial PC-PK1 2.744 1.067 0.959 637 This work DRHBc^{w/ Erot} Axial PC-PK1 1.518 1.104 1.095 637 This work RCHB Spherical PC-PK1 8.036 1.573 1.587 630 [77] RHB^{w/o Ecorr} Triaxial PC-PK1 2.635 1.064 0.929 628 [78] RHB^{w/ Ecorr} Triaxial PC-PK1 1.335 0.751 0.755 628 [78] RHB Axial DD-ME2 2.377 1.007 0.878 636 [73] RHB Axial DD-MEδ 2.309 1.035 1.041 634 [73] RHB Axial DD-PC1 2.019 1.074 0.900 636 [73] RHB Axial NL3* 2.907 1.082 1.189 638 [73] RMF+BCS Axial TMA 2.113 0.967 1.150 642 [70] HFB Axial SkM 7.269 1.223 1.823 624 [27] HFB Axial SLy4 5.344 0.996 0.897 631 [27] HFB Axial SV-min 3.426 0.790 0.817 629 [27] HFB Axial UNEDF1 1.926 0.747 0.780 632 [27]

PC-PK1 is significantly improved by including the rotational correction energies, which has been shown for Nd isotopes in Ref. [109]. By comparing the DRHBc results with the spherical RCHB results, we find that the inclusion of deformation degrees of freedom is very important for the description of nuclear masses. By comparing the DRHBc results with the triaxial RHB (TRHB) results, including triaxial deformation degree of freedom and considering the dynamical correlation energies might further improve the accuracy. By comparing the DRHBc results with those from other relativistic and nonrelativistic density functional calculations, we find that the present PC-PK1 calculations including rotational correction energies provide a better description for nuclear masses.

The two-nucleon separation energies are described with an accuracy around 1 MeV for most density functional calculations as shown in Table I. Because of the assumed spherical symmetry, the description accuracy of the RCHB theory for two-nucleon separation energies is about 1.5 MeV, slightly larger than the others. Different from the TRHB calculations with PC-PK1, the inclusion of the rotational correction energies does not improve the global description of two-nucleon separation energies in the DRHBc calculations. This is because the cranking approximation used to obtain the rotational correction energy in the present DRHBc calculations [109] is not suitable for spherical or nearly spherical nuclei. Using the collective Hamiltonian method to estimate the beyond-mean-field correlation energies in the DRHBc theory is expected, and such work is in progress. Following the works in Ref. [78], the accuracies for nuclear masses and two-nucleon separation energies can be expected to be further improved to less than 1.4 MeV and 0.8 MeV respectively by including the beyondmean-field correlation energies from the collective Hamiltonian method.

B. The limits of the nuclear landscape

In Fig. 1, the nucleon drip lines predicted by other mass tables, RCHB with PC-PK1 [77], RHB with PC-PK1 [78] and with NL3* [73], HFB with UNEDF1 [27], RMF+BCS with TMA [70], FRDM(2012) [20], and WS4 [22] have been plotted. At present, the experimental proton-rich border of the nuclear territory has been reached up to neptunium (Z = 93) [17]. Due to the Coulomb repulsive interaction among protons, the proton drip line does not lie so far away from the valley of stability. Moreover, the proton continuum is effectively shifted up in energy due to the Coulomb barrier. Therefore, the proton drip lines obtained by different models are close and roughly consistent with the experimental observations.

On the neutron-rich side, however, the neutron-rich boundary is known only up to neon (Z = 10) experimentally [18]. In contrast to the proton drip line, the locations of neutron drip lines from various mass tables obviously differ with each other, and the differences increase with the proton number. Compared with the neutron drip line in the spherical RCHB theory, the inclusion of the deformation effects does not necessarily extend the drip line. The deformation effects on the location of neutron drip line have been studied from O to Ca isotopes in Ref. [111]. It is found that the direction of the change in the neutron drip line depends on the evolution of deformation towards the drip line: the drip line extends to the more neutron-rich side if the deformation increases towards the drip line, and vice versa. This mechanism is found to be valid for heavier Sm, Gd, and Dy isotopic chains in

Ref. [113].

There are almost no triaxially deformed even-even nuclei near the neutron drip line [78]. However, as shown in Fig. 1, the neutron drip lines predicted by the DRHBc and TRHB calculations are not the same. For several isotopic chains, e.g. 38 ≤ Z ≤ 42, the DRHBc calculations predict a more extended neutron drip line than the TRHB calculations, where the harmonic oscillator basis is used, in which the continuum effects are not taken into account well. It is shown in Ref. [77] that the coupling between the continuum and bound states is relevant to the extension of the neutron drip line. For the Pb (Z = 82) isotopic chain, the neutron drip line locates at the predicted shell closure N = 184 in the DRHBc calculations, while it extends slightly to the more neutron-rich region in the TRHB calculations. This may be caused by the adopted different pairing interactions, i.e., the δ pairing in DRHBc and the separable pairing [121] in TRHB. In addition, the isospin-violating nucleon-nucleon interaction may influence the location of the neutron drip line as well [122, 123].

Compared with other density functional calculations, the DRHBc calculations with PC- PK1 generally predict a more extended neutron drip line with a few exceptions. This is mainly because of the proper treatment of the continuum in the DRHBc theory and the adopted density functional. On the other hand, compared with density functional calculations, the neutron drip lines predicted by the macroscopic-microscopic mass models FRDM [20] and WS4 [22] are systematically closer to the valley of stability. It has been shown in Ref. [112] that, compared with the microscopic DRHBc calculations with PC-PK1, these macroscopic-microscopic mass models have a different isospin dependence in describing superheavy nuclear masses.

As shown in Fig. 1, there exist some bound nuclei beyond the primary neutron drip line in the regions of 50 ≤ Z ≤ 70, 80 ≤ Z ≤ 90, and 100 ≤ Z ≤ 120, forming peninsulas of stability adjacent to the nuclear mainland. Near these peninsulas, there are several multineutron emitters that have positive S_{2n} but negative multi-neutron separation energies. To explore the underlying mechanism behind this interesting phenomenon, the neutron separation energies, Fermi surfaces, quadrupole deformations, and single-particle spectra in the canonical basis have been investigated for 50 ≤ Z ≤ 70 and 100 ≤ Z ≤ 120 [112– 114]. It is found that the deformation plays a decisive role in the formation of these stability peninsulas, and meanwhile the pairing correlations and continuum effects also influence them in a self-consistent way. Furthermore, it is shown in Refs. [114, 124] that the effects of higher order deformations such as β_4 and β_6 are very important. The decay rates of multi-neutron radioactivity in Ba and Sm isotopic chains are estimated by using the direct decay model in Ref. [113].

C. Two-nucleon gaps and possible magic numbers

The two-neutron gap δ_{2n} and the two-proton gap δ_{2p} are respectively defined as

δ_{2n}(Z, N) = S_{2n}(Z, N) − S_{2n}(Z, N + 2), (8) δ_{2p}(Z, N) = S_{2p}(Z, N) − S_{2p}(Z + 2, N). (9)

A peak of the two-nucleon gaps implicates the drastic change of the two-nucleon separation energies, which can be used as one of the signatures for magic numbers [92, 120]. Compared with two-nucleon separation energies, two-nucleon gaps are more intuitive in indicating possible magic numbers and clearer in exploring possible subshells.

FIG. 4: (Color online) Two-neutron gaps δ_{2n} of bound even-even nuclei with 8 ≤ Z ≤ 120 in the DRHBc calculations with PC-PK1 scaled by colors.

Figure 4 shows the two-neutron gaps δ_{2n} of bound even-even nuclei with 8 ≤ Z ≤ 120 in the DRHBc calculations with PC-PK1. Peaks of δ_{2n} at neutron numbers N = 8, 20, 28, 50, 82, 126, 184 and 258 can be clearly seen in Fig. 4, which leads to the same conclusion for shell closures as in Fig. 2. It is noted that the peaks at N = 28, 50, and 80 become weaker or even disappear near the neutron drip lines for Z ≈ 10, 20, and 32, respectively, which suggests the quenching or even collapse of the traditional neutron shell closures 28, 50, and 82 in the neutron-rich region far from the stability valley. There are also some hints at spherical or deformed subshells, for example, N = 40 in the Z ≈ 20 region and N = 162 in the Z ≈ 110 region. Further confirmation of such subshells needs detailed analysis for deformation and the evolution of single-neutron levels with deformation from constrained calculations.

FIG. 5: (Color online) Two-proton gaps δ_{2p} of bound even-even nuclei with 8 ≤ Z ≤ 120 in the DRHBc calculations with PC-PK1 scaled by colors.

Figure 5 shows the two-proton gaps δ_{2p} of bound even-even nuclei with 8 ≤ Z ≤ 120 in the DRHBc calculations with PC-PK1. The traditional magic numbers Z = 8, 20, 28, 50 and 82 are obvious. The δ_{2p} for Z = 120 has not been extracted since the Z = 122 isotopes have not been calculated in this work. It is noted that Z = 120 was predicted to be the next proton magic number in many density functional calculations [92, 120]. Peaks of the δ_{2p} can be also found for several Z = 14 isotopes and at Z = 92 near the regions of N ≈ 184 and 258. Z = 14 is regarded as an oblate subshell from the level scheme of the Nilsson model for light nuclei [116], and here the Z = 14 isotopes with large δ_{2p} are generally oblate in their ground states, see Figs. 9 and 10(a). However, Z = 92 has been considered as a pseudo shell in the previous relativistic mean-field calculations [125].

D. Rms radii

1. Charge radii

FIG. 6: (Color online) For the 369 even-even nuclei (8 ≤ Z ≤ 120) with charge radius measured, the deviations between the DRHBc calculations with PC-PK1 and the data are scaled by colors.

The nuclear charge radius is one of the most important nuclear observables that estimates the size of nuclei. In Fig. 6, the deviations of charge radii between the DRHBc calculations and the experimental data are scaled by colors for the 369 even-even nuclei with the charge radius measured [118, 119]. One can see that the DRHBc calculations provide, in general, a good description of the data, and deviations are mostly in the range of −0.05 to 0.05 fm. Compared with the rms deviation σ = 0.036 fm in the RCHB calculations, the rms deviation has been reduced to σ = 0.032 fm in the DRHBc calculations by the inclusion of deformation. However, for several light nuclei with Z < 20, there exist discrepancies between theory and experiment. For some Pt (Z = 78) and Hg (Z = 80) isotopes around N ≈ 104, the DRHBc theory overestimates the experimental values. This overestimation can be understood, as their ground states are predicted to be prolate with large quadrupole deformation β_2 ≈ 0.3 (see Fig. 9) which is in contradiction with experimental observations [126]. Finally, a systematic overestimation is seen for the Cm (Z = 96) isotopic chain, which is related to the unusual behavior of charge radii in the U-Pu-Cm isotopes [118]. The increase of proton number in an isotonic chain generally leads to an increase of the charge radius, but the experimental charge radii of Cm (Z = 96) isotopes are found lower than those of the Pu (Z = 94) and U (Z = 92) isotones. This is the only case of such inversion in the nuclear chart and considered to be a challenge for the current density functional theory [73]. Machine learning has recently been applied to improve the description accuracy of charge radii based on the density functional theory [127] and the empirical formula [128].

2. Neutron radii

In Fig. 7, the calculated neutron rms radii for even-even nuclei with 8 ≤ Z ≤ 120 are shown as a function of the neutron number. In addition, the empirical formula R_n = r_0N^{1/3} is shown for guidance with r_0 = 1.140 fm determined by the R_n of^{208}Pb. Except for extremely neutron-rich nuclei, the systematic trend of the neutron radii reasonably follows the simple empirical formula. Pronounced deviations of the DRHBc calculations from the empirical formula can be found in some extremely neutron-rich nuclei near the drip line, e.g., the near-drip-line Mg and Ca nuclei. Such deviations can be regarded as one of the signals for the halo or giant halo phenomena.^{42,44}Mg have been predicted to be deformed halo nuclei by the DRHBc theory [97, 98], and giant halos have been predicted to exist in neutron-rich Ca isotopes near the drip line by the RCHB theory [88, 89, 129] together with the Skyrme HFB theory [129].

To achieve deeper insight into the deviations from the empirical formula, the differences of the neutron rms radii between the DRHBc calculations and the empirical formula are shown in Fig. 8 for even-even nuclei with 8 ≤ Z ≤ 120, in which the smallest ratio R_n/N^{1/3} in each isotopic chain is chosen as r_0 to ensure non-negative values. In general, along one isotopic chain, the R_n − r_0N^{1/3} value first decreases and then increases with the neutron number, and the zero deviation appears near the most stable isotope. It is found that the zero deviation concentrates near N = 20, 28, 50, 82, 126, 184, and 258, which reflects the effects of neutron shell closures. There are some sudden increases of R_n − r_0N^{1/3} at N ≈ 190 and 270, which is related to the sudden shape changes from nearly spherical to strongly prolate for Z ≳ 110 isotopic chains and will be discussed later in Fig. 9. Near the neutron drip line, one can see pronounced deviations in some isotopic chains, such as Mg, Ca, Se, and Rn, which indicate the possible existence of the halo or giant halo phenomena. A further study to explore the possible halo structures in these nuclei needs careful analysis

FIG. 7: (Color online) Neutron rms radii for even-even nuclei with 8 ≤ Z ≤ 120 from the DRHBc calculations with PC-PK1 as a function of the neutron number. The empirical formula r_0N^{1/3} with r_0 = 1.140 fm determined from the neutron rms radius of^{208}Pb is plotted for guidance.

on the neutron separation energies, single-neutron levels near the Fermi surface, and their components, which is beyond the scope of the present work.

E. Quadrupole deformation and potential energy curves

1. Quadrupole deformation

In Fig. 9, the ground-state quadrupole deformations β_2 given by the DRHBc calculations are presented. 542 nuclei are spherical near the closed shells. The number of nuclei with prolate ground-state deformations β_2 > 0 is 1547, while that of oblate nuclei with β_2 < 0 is 478. In general, the nuclear shape evolution in a isotopic chain between two closed shells is parabolic, i.e., |β_2| gradually increases from zero to a certain value in the mid-shell region, and then decreases to zero, for instance, see Z = 58, 82 ≤ N ≤ 126. Some sudden shape changes from β_2 ≈ 0 to β_2 ≳ 0.4 are found after the predicted shell closures N = 184 and 258 in the superheavy Z ≳ 110 isotopic chains. This is due to the competition between the nearly spherical minimum and the prolate one, which is clearly shown in their potential

FIG. 8: (Color online) Deviations of the DRHBc calculated neutron rms radii from the empirical formula r_0N^{1/3} for even-even nuclei with 8 ≤ Z ≤ 120, in which the smallest ratio R_n/N^{1/3} is chosen as r_0 for each isotopic chain to ensure non-negative values.

energy curves, e.g., see Fig. 10(c). For these nuclei, the prolate minimum becomes the global minimum, i.e., the ground state, after adding a few neutrons to the closed shells N = 184 and 258. Consequently, their rms neutron radii increase dramatically relative to the nearly spherical neighbors, as shown in Fig. 8. It should be noted that in some regions with prolateoblate shape transitions, the triaxial deformation may play an important role. For example, several cases can be found in the light mass region with Z < 20, which are also shown more clearly in Fig. 10(a) and in Fig. 1 of Ref. [111]. Actually, the effects of triaxiality have been investigated in this region, e.g. on the ground states and low-energy collective states in Mg isotopes [130, 131]. In addition, many nuclei in the heavier mass region with N = 114 to 120 and Z = 54 to 78 are predicted to be triaxially deformed in TRHB calculations with PC-PK1 [78].

FIG. 9: (Color online) Quadrupole deformations from the DRHBc calculation with PC-PK1 for bound even-even nuclei with 8 ≤ Z ≤ 120 scaled by colors.

2. Evolutions of potential energy curves

To understand the shape evolution better, Fig. 10 shows the potential energy curves (PECs) of^{24,26,··· ,52}Si,^{142,152,··· ,232}Gd, and^{282,298,··· ,410}Fl as examples. The evolution of ground-state deformation is also depicted for guidance. The global minima of these PECs obtained from constrained calculations are consistent with the ground states from unconstrained ones, which guarantees the self-consistency of the present DRHBc calculations.

In the Si isotopic chain, the steep PEC of^{34}Si reflects clearly the effects of the closed shell N = 20. The maximal |β_2| for^{42}Si and its rather flat PEC between β_2 = −0.3 and 0.1 indicate the disappearance of the traditional magic number N = 28. In fact, as shown in Fig. 9, all the N = 28 even-even isotones from Z = 10 to 18 are predicted to be deformed in their ground states, suggesting the collapse of N = 28 shell closure in this neutron-rich region. Further exploration of the possible occurrence of new magic numbers N = 32 and 34 in Si isotopes requires the analysis of neutron separation energies, single-neutron levels, the energy of the first excited state, etc.

In the Gd isotopic chain, the shape evolution of nearly parabolic type is found between N = 82 and 126 as well as between N = 126 and 184, while the prolate-oblate shape transitions also exist near the regions of N = 110 and N = 160. The TRHB calculations with PC-PK1 [78] predict several triaxially deformed nuclei in the former region, and a

FIG. 10: (Color online) Evolution of potential energy curves of^{24,36,··· ,52}Si (a),^{142,152,··· ,232}Gd (b), and^{282,298,··· ,410}Fl (c) from the constrained DRHBc calculations with PC-PK1. For clarity reasons, in each panel, the PEC of the lightest isotope (^{24}Si,^{142}Gd, and^{282}Fl, respectively) is renormalized to its ground state (filled square), and other PECs are shifted upward one by one by 2 MeV for Si and Gd and by 1 MeV for Fl, per increasing 2 neutrons. The ground-state deformations are denoted by squares.

similar prolate-oblate shape transition in the latter one. Therefore, the shape coexistence in nuclei near the region of Z ≈ 64, N ≈ 160 is expected.

In the Fl chain, except for a smooth shape evolution with the neutron number approaching the predicted shell closure N = 258, the above mentioned sudden changes of ground-state deformation from β_2 ≈ 0 to β_2 ≳ 0.4 after N = 184 and 258 are displayed. The nearly degenerate spherical and prolate minima are clearly revealed in the PECs of^{298}Fl and^{378}Fl. The competition between these two minima after the closed shells leads to the sudden change of ground-state deformation.

FIG. 11: (Color online) Angle averaged neutron density distribution (Angle averaged), the neutron density distribution along the symmetry axis z (θ = 0^∘), and that perpendicular to the symmetry axis with r_⊥ = √ x^2 + y^2 (θ = 90^∘), for selected even-even isotopes^{32,42,52}Si (a,b,c),^{142,152,··· ,232}Gd (d,e,f), and^{282,292,··· ,412}Fl (g,h,i) in the DRHBc calculations with PC-PK1.

F. Neutron density distributions

To investigate the evolution of the neutron densities, Fig. 11 shows the neutron density profiles of selected even-even isotopes^{32,42,52}Si,^{142,152,··· ,232}Gd, and^{282,292,··· ,412}Fl. The angle averaged neutron density distributions, the neutron density distributions along the symmetry axis (θ = 0^∘), and those perpendicular to the symmetry axis (θ = 90^∘) are depicted in the left, middle, and right panels, respectively. As seen in panels (a, d, g), there is a global trend that the angle averaged density distributions are extended further with the neutron number. The surface expands outward rapidly, while the internal density distribution changes slightly. Comparing the θ = 0^∘ and 90^∘ parts, one can find that the neutron density distributions manifest not only the diffuseness with the increasing neutron number but also the deformation effects. Due to the oblate deformations of^{222}Gd and^{232}Gd, their densities along the symmetry axis are less than those of^{202}Gd and^{212}Gd at 6 ≲ z ≤ 18 fm, as exhibited in Fig. 11(e). On the contrary, their densities perpendicular to the symmetry axis shown in Fig. 11(f) are obviously larger than others at z ≳ 6 fm. More specifically, the sudden shape transitions from near spherical to large prolate in Fl isotopes are clearly reflected by the dramatic changes in density distributions along the symmetry axis, i.e., from^{302}Fl to^{312}Fl and from^{372}Fl to^{382}Fl, as shown in Fig. 11(h). Because of the spherical shape, the density distribution of^{372}Fl is angular independent and larger than those of the heavier and prolate deformed^{382,392}Fl at θ = 90^∘ in the region of large r_⊥. For the nuclei near the neutron drip line, the diffuse neutron density distribution is an indicator for the neutron skin or halo. The further distinction between the neutron skin and halo requires a careful analysis of single-neutron levels, their components, and their contributions to the total neutron density, as was done for the neutron-rich^{214}Nd nucleus in Ref. [109].

G. Neutron potential and diffuseness

To examine the isospin dependence of the mean-field potentials, the neutron vector plus scalar potentials V (r) + S(r) for selected even-even isotopes^{32,42,52}Si,^{142,152,··· ,232}Gd, and

282,292,··· ,412Fl are reported in Fig. 12, in terms of the angle averaged potential and those

along (θ = 0^∘) and perpendicular to (θ = 90^∘) the symmetry axis. Generally, the depth of the potential rises with the neutron number, except for some fluctuations due to the shell structure and deformation effects. Intriguingly, a central depletion is found in the neutron potential for^{32}Si in upper panels, which might be related to its neutron density, since the potentials and densities are connected in a self-consistent way. By plotting the neutron density of^{32}Si in the linear coordinate, a similar central depletion can be found. By the further analysis of the components of the single-neutron levels, the level mainly occupied by the two valance neutrons has about 93% 1d_{3/2} and 7% 1d_{5/2} components, while the level just below it, which should be 2s_{1/2} in the spherical limit, is now mixed with around 40% 1d components due to the deformation effects. The loss of 2s component leads to the central depletion in the neutron density and is to some extent responsible for the central depletion in the potential.

At the surface, the potentials extend outward and the diffuseness increases generally with the neutron number. Consequently, the potentials for the nuclei near the neutron drip line become highly diffused. This will dramatically influence the weakly bound orbitals and resonant ones near the threshold, especially those with low-l components, and may lead to halos in drip-line nuclei.

FIG. 12: (Color online) Same as Fig. 11, but for the neutron mean-field potential V + S.

H. Pairing energies

To examine the pairing correlations globally, we investigate the pairing energies for eveneven nuclei in the DRHBc calculations with PC-PK1. In Fig. 13, the neutron pairing energies E^n_{pair} of bound even-even nuclei with 8 ≤ Z ≤ 120 are scaled by colors. One can see that the neutron pairing energies approach zero or even vanish for the nuclei near the closed shells N = 8, 20, 28, 50, 82 and 126, and in general the maximum values appear in the middle of the shells. The neutron pairing energies vanish at N = 184 and 258, which agrees with the above discussion for shell closures by S_{2n} and δ_{2n}. The very small E^n_{pair} for light nuclei with Z < 20 and N < 20 may be due to the low density of single-particle levels. In other regions, the vanishing E^n_{pair} along a part of an isotonic chain may be related to spherical or deformed subshells, e.g. N = 40 in the Z ≈ 20 region and N = 162 in the Z ≈ 110 region, as shown in Fig. 4 for δ_{2n}. Finally, for the isotopic chains with Z around 10, 20, and 32, E^n_{pair} for the nuclei near the neutron drip line are not small, which suggests the disappearance of the traditional neutron magic numbers 28, 50, and 82 in these neutron-rich exotic nuclei. This is also consistent with the weak δ_{2n} in these regions in Fig. 4.

FIG. 13: (Color online) Neutron pairing energies of bound even-even nuclei with 8 ≤ Z ≤ 120 in the DRHBc calculations with PC-PK1 scaled by colors.

The proton pairing energies E^p_{pair} of bound even-even nuclei with 8 ≤ Z ≤ 120 are presented in Fig. 14. Many features similar to the neutron pairing energies can be found, such as the nearly vanishing E^p_{pair} near the closed shells Z = 8, 20, 28, 50, and 82 and the very small E^p_{pair} for light nuclei with Z < 20 and N < 20. E^p_{pair} also approach zero or even vanish for the nuclei near the proton drip line of Z = 120, which is predicted to be the next proton magic number by many relativistic density functionals [92, 120]. There are also small E^p_{pair} along a part of an isotopic chain, e.g. near N = 60 at Z = 34 and near N = 184, 258 at Z = 92. The former might indicate Z = 34 as a deformed proton subshell, whose confirmation requires a further investigation of the evolution of single-proton levels with the deformation. The latter corresponds to Z = 92, and from Fig. 9 these nuclei with small E^p_{pair} are spherical. However, no experimental evidence indicates Z = 92 as a magic number, and it has been considered as a pseudo shell in relativistic density functionals TMA, NL3, PKDD, and DD-ME2 [125].

FIG. 14: (Color online) Proton pairing energies of bound even-even nuclei with 8 ≤ Z ≤ 120 in the DRHBc calculations with PC-PK1 scaled by colors.

I. Alpha decay energies

By using the binding energies in the DRHBc calculations with PC-PK1, we can extract the α decay energies Q_α via,

Q_α = E_b(Z − 2, N − 2) + E_b(2, 2) − E_b(Z, N). (10)

In Fig. 15, the differences of Q_α between our calculations and the data [14] for nuclei with Q_α > 0 are scaled by colors. The number of data is 296 and the obtained rms deviation is σ = 0.846 MeV, which is comparable to some other representative mass tables, such as σ = 0.901 MeV in RHB + DD-PC1 calculations and σ = 0.939 MeV in RHB + DD-ME2 calculations [73]. Compared with σ ≈ 2 MeV in the RCHB + PC-PK1 calculations [94], the description of Q_α has been improved by the inclusion of deformation degrees of freedom. In the TRHB + PC-PK1 calculations, the description of Q_α is improved a lot from σ = 0.989 MeV to 0.552 MeV by including the beyond-mean-field correlation energies from the collective Hamiltonian method, which is suitable for both nearly spherical and deformed nuclei. We note that many large deviations in the DRHBc calculations appear near the shell closures N = 82 and 126, which is caused by the overestimation of the binding energies for the nuclei with N = 82 and 126 and the underestimation for their nearly spherical neighbors, as shown in Fig. 1. The strength of shell closures is generally overestimated by the CDFT [40], and the cranking approximation used to obtain the rotational correction energy in the DRHBc calculations is not suitable for nearly spherical nuclei. Therefore, the ongoing work implementing the collective Hamiltonian method in the DRHBc theory is expected to improve the description of Q_α, especially near the closed shells. Similar to the study on the α decay energies from the RCHB calculations in Ref. [94], the DRHBc calculated Q_α can be investigated systematically to explore the shell effects and predict new magic numbers. Furthermore, combining the density functional theory with the Wentzel-Kramers- Brillouin (WKB) method, the α decay half-lives can be estimated without introducing any adjustable parameter [132]. It would be interesting to systematically study α decay energies and estimate the α decay half-lives with the DRHBc theory in the near future.

FIG. 15: (Color online) α decay energy Q_α differences between the data [14] and the DRHBc calculations with PC-PK1 for nuclei with Q_α > 0, scaled by colors.

V. SUMMARY

In summary, we have performed systematic studies of all even-even nuclei from Z = 8 to Z = 120 by using the DRHBc theory with the density functional PC-PK1. The calculated binding energies, two-nucleon separation energies, rms radii of neutron, proton, matter, and charge distributions, quadrupole deformations, and neutron and proton Fermi surfaces are tabulated.

With the deformation degrees of freedom and continuum effects included, there are 2583 even-even nuclei in total, which are predicted to be bound from Z = 8 to Z = 120. For the experimental binding energies of 637 even-even nuclei, the description accuracy is 1.518 MeV, which is one of the highest accuracies in the microscopic description of nuclear masses, and shows the importance of deformation effects by comparing with the spherical RCHB mass table. The proton drip line predicted by the DRHBc theory is close to those predicted by other models, because on the proton-rich side the continuum effects are not pronounced owing to the Coulomb barrier. By contrast, the locations of neutron drip lines from various models obviously differ from each other, especially in the heavy mass region. Compared with the spherical RCHB calculations with PC-PK1, it is found that, the drip line extends to the more neutron-rich side if the deformation increases towards the drip line, and vice versa [111, 113]. Compared with the TRHB calculations with PC-PK1, almost no even-even nuclei near the neutron drip line are triaxially deformed, and the continuum effects may be responsible for the extension of the neutron drip line in several isotopic chains. Compared with other density functional calculations, the DRHBc calculations with PC-PK1 generally predict a more extended neutron drip line with a few exceptions. This is mainly because of the proper treatment of the continuum in the DRHBc theory and the adopted density functional. In addition, there exist some bound nuclei beyond the primary neutron drip line in several regions, forming peninsulas of stability adjacent to the nuclear mainland. The deformation plays a decisive role in the formation of these stability peninsulas, and the pairing correlations and continuum effects also influence them in a self-consistent way [112– 114].

The two-neutron and two-proton separation energies are extracted and systematically discussed over the nuclear chart. The traditional magic numbers are reproduced by the two-nucleon separation energies and two-nucleon gaps, and new magic numbers N = 184 and 258 are predicted. Furthermore, possible spherical or deformed subshells are indicated by the two-nucleon gaps.

For the experimental charge radii of 369 even-even nuclei, the description accuracy is 0.032 fm, which has been improved by the inclusion of deformation in comparison with the spherical RCHB calculations. The comparison of the neutron rms radii of even-even nuclei with 8 ≤ Z ≤ 120 between the DRHBc calculations and the empirical formula are performed. The systematic trend of the neutron radii in the DRHBc calculations follows the simple empirical formula quite well with a few exceptions. Some sudden increases of neutron radii reflect the deformation effects, e.g., the sudden shape change from β_2 ≈ 0 to β_2 ≳ 0.4 in Z ≳ 110 isotopic chains. The pronounced deviations of the DRHBc calculations from the empirical formula for some extremely neutron-rich nuclei might be a signal for the halo or giant halo phenomena.

The quadrupole deformations for even-even nuclei with 8 ≤ Z ≤ 120 given by the DRHBc calculations are presented and discussed. The evolution of ground-state deformations is understood with the help of the potential energy curves from constrained calculations. For some regions with prolate-oblate shape transitions, the possible triaxial deformation and shape coexistence are discussed in combination with the results from TRHB calculations with PC-PK1 [78].

The angle averaged neutron density distributions as well as those along and perpendicular to the symmetry axis for selected even-even Si, Gd, and Fl isotopes are depicted. The diffuseness with the increasing neutron number and the deformation effects on the neutron density distributions are discussed. Similar to the neutron density, the neutron mean-field potentials for selected even-even Si, Gd, and Fl isotopes are discussed. In general, the depth of the potential rises with the neutron number, except for some fluctuations due to the shell structure and deformation effects. At the surface, the potentials extend outward and the diffuseness increases generally with the neutron number. Taking^{32}Si as an example, the central depletion in its neutron potential is investigated by analyzing the components of single-neutron levels near the Fermi surface.

The pairing energies of the even-even nuclei over the nuclear landscape are presented. The pairing energies approach zero or even vanish for the nuclei near the closed shells, and in general they have maximum values for nuclei in the middle of the shells. New magic numbers N = 184 and 258 and Z = 120 for superheavy nuclei and some subshells are predicted. The collapse of traditional shell closures near the neutron drip lines of some isotopic chains is discussed.

Finally, the α decay energies Q_α are extracted for the nuclei with Q_α > 0 and compared with 296 available data. The obtained rms deviation is σ = 0.846 MeV, which has been reduced by deformation effects in comparison with the RCHB calculations [94]. A future work combining the DRHBc theory and WKB method to estimate the α decay half-lives is expected.

The successful exploration of the even-even nuclei in the nuclear chart by using the DRHBc theory with the relativistic density functional PC-PK1 demonstrates the importance of the simultaneous consideration of the deformation and continuum effects. Works in constructing a DRHBc mass table for odd-mass and odd-odd nuclei are in progress.

Acknowledgments

This work was partly supported by the National Natural Science Foundation of China (Grants No. 11935003, No. 11875075, No. 11975031, No. 12141501, No. 12070131001, No. 12075085, No. 12047568, No. 11790325, No. 11790323, No. 11735003, No. 11975041, No. 12047503, No. 11975237, and No. 11961141004), the National Key R&D Program of China (Contracts No. 2017YFE0116700 and No. 2018YFA0404400), the State Key Laboratory of Nuclear Physics and Technology, Peking University (Grant No. NPT2020ZZ01), the Strategic Priority Research Program of Chinese Academy of Sciences (Grants No. XDB34010000 and No. XDPB15), the High-performance Computing Platform of Peking University, the High-performance Computing Platform of Anhui University, the Rare Isotope Science Project of Institute for Basic Science, funded by Ministry of Science and ICT (MSICT), and National Research Foundation of Korea (2013M7A1A1075764). This work was partly supported by the National Research Foundation of Korea (Grant Nos. NRF- 2018R1D1A1B05048026, NRF-2020R1A2C3006177, NRF-2020K1A3A7A09080134, NRF- 2021R1F1A1060066, and NRF-2021R1A6A1A03043957) and the National Supercomputing Center with supercomputing resources including technical support (KSC-2020-CRE- 0329, KSC-2021-CRE-0126, and KSC-2021-CRE-0272). YBC and CHL were supported by National Research Foundation of Korea (NRF) grants funded by the Korea government (Ministry of Science and ICT and Ministry of Education) (No. 2016R1A5A1013277 and No. 2018R1D1A1B07048599). QZ was supported by Institute for Basic Science (Grant IBS- R031-D1). The results from ITP side are obtained on the High-performance Computing Cluster of ITP-CAS and the ScGrid of the Supercomputing Center, Computer Network Information Center of Chinese Academy of Sciences.

Explanation of Tables

Table II. Ground-state properties of even-even nuclei calculated by the DRHBc theory

Z Proton number N Neutron number A Mass number E^{cal}_b Binding energy from DRHBc calculations E^{cal}_{b+rot} Binding energy plus rotational correction energy from DRHBc calculations, which is suggested to be compared with the experimental value E^{exp}_b Binding energy from experimental data S_{2n} Two-neutron separation energy S_{2p} Two-proton separation energy R_n Neutron root-mean-square radius R_p Proton root-mean-square radius R_m Matter root-mean-square radius R^{cal}_{ch} Charge radius from DRHBc calculations R^{exp}_{ch} Charge radius from experimental data β_{2n} Neutron quadrupole deformation β_{2p} Proton quadrupole deformation β_2 Matter quadrupole deformation λ_n Neutron Fermi surface λ_p Proton Fermi surface σ rms deviations for binding energies and charge radii for each isotopic chain

Note: Since PC-PK1 is a non-linear density functional, it encounters high density instability in^{24,26}Mg and^{26,28}Si, similar to that in^{12}C by NL1 [133].

TABLE II: Ground-state properties.

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) Z = 8 (O) 12 4 59.70 59.70 58.58 -2.37 2.329 2.915 2.734 3.022 0.000 0.000 0.000 -19.36 -2.15 14 6 101.16 101.16 98.73 41.46 1.49 2.250 2.639 2.480 2.758 0.000 0.000 0.000 -16.55 -1.18 16 8 127.28 127.28 127.62 26.11 20.45 2.626 2.650 2.638 2.768 2.699 0.000 0.000 0.000 -11.42 -7.78 18 10 140.97 140.97 139.81 13.69 27.18 2.806 2.642 2.734 2.760 2.773 0.000 0.000 0.000 -6.67 -11.63 20 12 152.43 152.43 151.37 11.47 33.79 2.960 2.645 2.838 2.763 0.000 0.000 0.000 -5.70 -15.15 22 14 162.45 162.45 162.03 10.02 40.10 3.105 2.653 2.949 2.771 0.000 0.000 0.000 -4.88 -18.31 24 16 171.07 171.07 168.95 8.62 45.83 3.267 2.659 3.078 2.777 0.000 0.000 0.000 -3.33 -20.24 26 18 174.80 174.80 168.93 3.73 50.72 3.432 2.731 3.232 2.846 0.000 0.000 0.000 -2.12 -22.16 28 20 178.14 178.14 3.34 54.80 3.573 2.794 3.369 2.906 0.000 0.000 0.000 -0.85 -24.13 30 22 177.41 177.41 -0.73 55.27 3.883 2.807 3.627 2.919 0.000 0.000 0.000 0.04 -24.59 σ 2.47 2.47 0.049 Z = 10 (Ne) 16 6 100.15 100.15 97.33 -1.01 2.286 3.015 2.764 3.119 0.000 0.000 0.000 -19.51 0.50 18 8 133.09 133.09 132.14 32.94 5.81 2.628 2.851 2.754 2.961 2.971 0.000 0.000 0.000 -15.21 -2.47 20 10 155.57 158.24 160.64 22.48 14.60 2.869 2.899 2.884 3.007 3.006 0.535 0.550 0.542 -11.69 -7.47 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 22 12 175.57 178.50 177.77 20.00 23.13 2.957 2.844 2.906 2.955 2.953 0.494 0.460 0.479 -8.45 -11.51 24 14 189.95 192.86 191.84 14.38 27.50 3.019 2.786 2.924 2.899 2.901 -0.245 -0.197 -0.225 -7.28 -13.05 26 16 201.96 201.96 201.55 12.01 30.89 3.170 2.787 3.029 2.899 2.925 0.000 0.000 0.000 -5.29 -14.50 28 18 209.59 209.59 206.87 7.63 34.79 3.326 2.859 3.167 2.969 2.964 0.000 0.000 0.000 -4.05 -16.53 30 20 216.90 216.90 211.04 7.31 38.76 3.457 2.921 3.288 3.028 0.000 0.000 0.000 -2.48 -18.53 32 22 218.19 218.19 1.29 40.78 3.628 2.947 3.430 3.054 0.000 0.000 0.000 -0.93 -19.89 34 24 220.39 223.30 2.20 43.91 3.803 3.036 3.594 3.140 0.448 0.364 0.423 -1.05 -22.58 36 26 221.32 223.85 0.93 45.98 3.965 3.078 3.740 3.181 0.484 0.405 0.462 -0.51 -23.96 38 28 221.49 224.49 0.17 47.53 4.109 3.075 3.864 3.178 0.389 0.325 0.373 -0.29 -24.58 40 30 221.34 224.46 -0.15 48.98 4.246 3.081 3.987 3.183 0.285 0.275 0.283 -0.13 -25.15 σ 3.26 2.70 0.012 Z = 12 (Mg) 18 6 96.40 96.40 -3.75 2.314 3.308 3.013 3.403 0.000 0.000 0.000 -22.21 1.88 20 8 135.54 135.54 134.56 39.14 2.45 2.640 3.038 2.886 3.142 0.000 0.000 0.000 -18.45 -0.95 22 10 166.21 169.09 168.58 30.67 10.64 2.832 3.006 2.928 3.111 3.069 0.459 0.518 0.491 -15.69 -3.49 24 12 199.01 206.16 198.26 32.80 23.44 2.834 2.858 2.846 2.968 3.057 0.507 0.514 0.511 -12.98 -7.93 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 26 14 215.48 220.52 216.68 16.47 25.53 2.906 2.816 2.865 2.927 3.034 0.261 0.344 0.299 -8.13 -11.26 28 16 229.26 231.59 231.63 13.78 27.29 3.143 2.951 3.062 3.058 3.069 0.298 0.344 0.318 -7.21 -12.77 30 18 240.96 243.12 241.63 11.71 31.37 3.279 2.984 3.164 3.090 3.111 0.216 0.310 0.254 -5.56 -14.84 32 20 252.21 252.21 249.72 11.25 35.31 3.378 3.010 3.245 3.114 3.186 0.000 0.000 0.000 -4.43 -16.87 34 22 257.68 260.61 256.71 5.47 39.49 3.553 3.085 3.395 3.187 0.377 0.392 0.382 -3.77 -18.20 36 24 263.90 266.85 260.80 6.22 43.51 3.673 3.130 3.501 3.230 0.435 0.421 0.430 -2.69 -19.84 38 26 267.78 271.05 3.88 46.46 3.802 3.159 3.611 3.259 0.460 0.418 0.447 -1.85 -21.36 40 28 270.42 273.57 2.64 48.93 3.924 3.185 3.718 3.284 0.455 0.407 0.440 -1.17 -22.75 42 30 271.64 274.79 1.22 50.30 4.056 3.201 3.832 3.300 0.385 0.382 0.384 -0.72 -23.68 44 32 272.31 275.36 0.67 51.37 4.179 3.211 3.939 3.309 0.294 0.348 0.309 -0.49 -24.41 46 34 272.57 275.31 0.26 52.22 4.284 3.225 4.034 3.323 0.219 0.317 0.245 -0.24 -25.26 48 36 272.35 272.35 -0.22 53.15 4.327 3.206 4.076 3.304 0.000 0.000 0.000 0.05 -26.38 σ 1.87 3.93 0.067 Z = 14 (Si) 22 8 135.48 135.48 -0.06 2.656 3.232 3.035 3.330 0.000 0.000 0.000 -21.13 0.31 24 10 169.91 172.61 172.01 34.43 3.70 2.786 3.097 2.971 3.198 -0.207 -0.283 -0.251 -17.12 -1.86 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 26 12 204.03 207.64 206.04 34.12 5.02 2.828 2.968 2.904 3.074 0.328 0.250 0.286 -15.95 -2.68 28 14 234.29 239.37 236.54 30.26 18.81 2.962 2.993 2.978 3.098 3.122 -0.296 -0.304 -0.300 -12.66 -6.98 30 16 253.02 253.02 255.62 18.74 23.77 3.050 2.944 3.001 3.051 3.134 0.000 0.000 0.000 -9.08 -9.97 32 18 269.39 271.61 271.41 16.37 28.43 3.219 3.048 3.146 3.151 -0.191 -0.194 -0.192 -7.84 -12.04 34 20 284.74 284.74 283.46 15.35 32.53 3.313 3.069 3.215 3.171 0.000 0.000 0.000 -6.49 -14.35 36 22 292.93 292.93 292.05 8.19 35.25 3.418 3.092 3.295 3.194 0.000 0.000 0.000 -4.08 -16.28 38 24 300.43 303.93 299.93 7.50 36.53 3.557 3.147 3.411 3.247 -0.213 -0.216 -0.214 -4.02 -17.73 40 26 307.81 311.49 306.23 7.38 40.03 3.693 3.198 3.528 3.297 -0.310 -0.286 -0.302 -3.83 -19.29 42 28 315.13 318.29 7.32 44.71 3.818 3.247 3.638 3.344 -0.390 -0.335 -0.372 -2.88 -20.84 44 30 318.49 322.01 3.35 46.85 3.920 3.255 3.721 3.352 -0.341 -0.297 -0.327 -1.78 -21.91 46 32 321.19 324.33 2.71 48.89 4.016 3.261 3.802 3.358 -0.287 -0.256 -0.277 -1.36 -23.04 48 34 323.96 323.96 2.77 51.39 4.087 3.199 3.849 3.297 0.000 0.000 0.000 -1.28 -24.08 50 36 324.71 324.71 0.76 52.37 4.179 3.253 3.942 3.350 0.000 0.000 0.000 -0.49 -25.00 52 38 324.97 324.97 0.25 53.43 4.271 3.304 4.034 3.400 0.000 0.000 0.000 -0.24 -25.82 54 40 324.76 324.76 -0.21 54.32 4.390 3.358 4.147 3.452 0.000 0.000 0.000 0.16 -26.44 σ 1.81 2.66 0.061 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) Z = 16 (S) 24 8 133.36 133.36 -2.12 2.662 3.462 3.217 3.553 0.000 0.000 0.000 -23.70 2.10 26 10 170.96 170.96 37.61 1.06 2.783 3.282 3.100 3.378 0.000 0.000 0.000 -18.33 -1.19 28 12 207.00 209.32 209.41 36.03 2.97 2.938 3.215 3.099 3.313 0.344 0.310 0.324 -17.48 -1.28 30 14 241.38 241.38 243.68 34.39 7.09 2.917 3.104 3.018 3.205 0.000 0.000 0.000 -15.59 -2.94 32 16 269.35 269.35 271.78 27.97 16.33 3.059 3.097 3.078 3.199 3.261 0.000 0.000 0.000 -12.98 -6.79 34 18 289.29 289.29 291.84 19.93 19.90 3.194 3.138 3.168 3.238 3.285 0.000 0.000 0.000 -9.98 -8.87 36 20 308.37 308.37 308.71 19.08 23.63 3.306 3.178 3.250 3.277 3.299 0.000 0.000 0.000 -8.15 -10.80 38 22 320.45 322.56 321.05 12.08 27.52 3.422 3.209 3.334 3.307 0.160 0.169 0.164 -6.51 -12.62 40 24 332.92 335.55 333.17 12.48 32.49 3.532 3.246 3.420 3.343 0.282 0.254 0.271 -6.01 -14.54 42 26 343.41 346.39 344.12 10.48 35.59 3.624 3.271 3.494 3.368 0.303 0.268 0.290 -4.71 -16.41 44 28 351.42 354.35 351.82 8.01 36.28 3.742 3.302 3.588 3.397 0.340 0.276 0.317 -3.76 -17.70 46 30 357.64 360.41 6.22 39.15 3.827 3.313 3.657 3.408 0.279 0.239 0.265 -3.07 -19.17 48 32 363.01 365.81 5.37 41.82 3.931 3.330 3.742 3.425 -0.228 -0.187 -0.214 -2.69 -20.29 50 34 367.69 367.69 4.68 43.73 4.015 3.307 3.803 3.403 0.000 0.000 0.000 -2.27 -21.11 52 36 370.89 370.89 3.20 46.18 4.106 3.356 3.890 3.450 -0.031 -0.036 -0.032 -1.64 -22.30 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 54 38 373.47 373.47 2.58 48.51 4.188 3.403 3.972 3.496 0.000 0.000 0.000 -1.35 -23.45 56 40 375.62 375.62 2.14 50.86 4.265 3.455 4.050 3.547 0.000 0.000 0.000 -0.45 -24.61 58 42 375.08 375.08 -0.54 51.32 4.434 3.468 4.190 3.559 0.000 0.000 0.000 0.12 -25.10 σ 1.66 2.04 0.047 Z = 18 (Ar) 30 12 206.58 208.97 -0.42 2.979 3.383 3.228 3.477 0.326 0.240 0.274 -19.27 0.74 32 14 244.76 246.95 246.40 38.19 3.38 3.031 3.290 3.179 3.386 3.347 -0.196 -0.202 -0.199 -17.45 -1.19 34 16 276.40 276.40 278.72 31.64 7.05 3.106 3.245 3.180 3.342 3.365 0.000 0.000 0.000 -15.07 -3.28 36 18 303.66 306.28 306.72 27.26 14.38 3.242 3.282 3.262 3.378 3.391 -0.185 -0.191 -0.188 -12.51 -5.78 38 20 327.13 327.13 327.34 23.47 18.76 3.327 3.295 3.312 3.390 3.403 0.000 0.000 0.000 -10.68 -8.73 40 22 343.28 343.28 343.81 16.14 22.83 3.417 3.303 3.366 3.399 3.427 0.000 0.000 0.000 -7.89 -10.87 42 24 358.45 360.56 359.34 15.17 25.52 3.509 3.323 3.431 3.418 3.435 -0.149 -0.164 -0.155 -7.52 -12.51 44 26 372.46 374.98 373.73 14.02 29.06 3.590 3.337 3.489 3.432 3.445 -0.176 -0.175 -0.176 -6.78 -14.10 46 28 385.13 387.54 386.97 12.67 33.72 3.662 3.348 3.542 3.442 3.438 -0.206 -0.185 -0.197 -5.61 -15.68 48 30 394.43 397.15 395.70 9.30 36.79 3.778 3.377 3.633 3.471 -0.211 -0.183 -0.200 -4.52 -16.86 50 32 402.35 404.97 7.92 39.33 3.884 3.407 3.720 3.500 -0.225 -0.186 -0.211 -3.84 -17.92 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 52 34 409.00 411.59 6.65 41.31 3.979 3.441 3.802 3.533 -0.222 -0.186 -0.209 -3.23 -19.03 54 36 414.54 416.86 5.54 43.65 4.061 3.464 3.872 3.555 -0.169 -0.165 -0.167 -2.69 -20.46 56 38 418.94 420.78 4.39 45.46 4.138 3.493 3.942 3.584 -0.114 -0.144 -0.123 -2.10 -21.88 58 40 423.45 423.45 4.51 47.83 4.205 3.526 4.006 3.615 0.000 0.000 0.000 -1.49 -23.26 60 42 424.23 424.23 0.78 49.15 4.299 3.549 4.089 3.638 0.000 0.000 0.000 -0.48 -24.11 62 44 424.46 426.80 0.23 49.96 4.408 3.570 4.182 3.659 0.065 0.045 0.059 -0.33 -24.77 64 46 424.99 427.18 0.53 50.92 4.516 3.602 4.279 3.690 -0.187 -0.162 -0.180 -0.45 -25.03 66 48 425.40 427.76 0.42 51.99 4.622 3.624 4.372 3.711 -0.231 -0.174 -0.216 -0.36 -25.42 68 50 425.66 428.07 0.26 53.25 4.721 3.645 4.461 3.732 -0.263 -0.182 -0.241 -0.25 -25.79 70 52 425.69 428.14 0.03 54.53 4.814 3.664 4.547 3.751 -0.277 -0.185 -0.253 -0.10 -26.28 72 54 425.46 427.91 -0.23 55.68 4.904 3.682 4.629 3.768 -0.274 -0.185 -0.252 0.07 -26.78 σ 1.67 1.14 0.022 Z = 20 (Ca) 32 12 204.21 204.21 42.95 -2.36 3.003 3.494 3.319 3.585 0.000 0.000 0.000 -21.13 2.39 34 14 246.19 246.19 41.98 1.43 3.054 3.398 3.261 3.491 0.000 0.000 0.000 -19.68 -1.88 36 16 281.45 281.45 281.37 35.26 5.04 3.152 3.371 3.276 3.465 3.449 0.000 0.000 0.000 -16.90 -0.98 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 38 18 313.03 313.03 313.12 31.58 9.36 3.261 3.380 3.324 3.473 3.466 0.000 0.000 0.000 -15.43 -3.46 40 20 343.06 343.06 342.05 30.03 15.93 3.346 3.388 3.367 3.481 3.478 0.000 0.000 0.000 -12.98 -5.76 42 22 363.51 363.51 361.90 20.45 20.23 3.427 3.389 3.409 3.482 3.508 0.000 0.000 0.000 -9.95 -7.79 44 24 382.12 382.12 380.96 18.62 23.68 3.500 3.392 3.451 3.485 3.519 0.000 0.000 0.000 -9.12 -9.74 46 26 399.38 399.38 398.77 17.26 26.92 3.566 3.395 3.493 3.488 3.496 0.000 0.000 0.000 -8.39 -11.61 48 28 415.50 415.50 416.00 16.11 30.37 3.619 3.396 3.528 3.489 3.478 0.000 0.000 0.000 -7.02 -13.39 50 30 427.13 427.13 427.51 11.63 32.70 3.731 3.421 3.610 3.514 3.519 0.000 0.000 0.000 -5.76 -14.60 52 32 437.53 437.53 438.33 10.40 35.18 3.830 3.442 3.686 3.534 3.553 0.000 0.000 0.000 -5.03 -15.63 54 34 446.39 446.39 445.36 8.86 37.39 3.926 3.473 3.764 3.564 0.000 0.000 0.000 -4.42 -16.73 56 36 454.37 454.37 449.86 7.99 39.83 4.011 3.508 3.839 3.598 0.000 0.000 0.000 -4.06 -17.88 58 38 461.86 461.86 7.49 42.92 4.087 3.544 3.909 3.634 0.000 0.000 0.000 -3.73 -19.02 60 40 468.83 468.83 6.97 45.39 4.159 3.583 3.976 3.671 0.000 0.000 0.000 -2.59 -20.22 62 42 471.47 471.47 2.63 47.24 4.232 3.606 4.041 3.694 0.000 0.000 0.000 -1.34 -21.26 64 44 473.26 473.26 1.80 48.80 4.312 3.629 4.111 3.716 0.000 0.000 0.000 -1.04 -22.15 66 46 474.65 474.65 1.39 49.67 4.398 3.649 4.185 3.736 0.000 0.000 0.000 -0.87 -22.95 68 48 475.79 475.79 1.14 50.39 4.488 3.667 4.263 3.754 0.000 0.000 0.000 -0.76 -23.66 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 70 50 476.78 476.78 0.98 51.12 4.580 3.684 4.343 3.770 0.000 0.000 0.000 -0.67 -24.29 72 52 477.63 477.63 0.86 51.94 4.669 3.699 4.421 3.785 0.000 0.000 0.000 -0.60 -24.87 74 54 478.40 478.40 0.77 52.94 4.756 3.714 4.498 3.799 0.000 0.000 0.000 -0.52 -25.43 76 56 479.04 479.04 0.64 55.40 4.839 3.728 4.573 3.813 0.000 0.000 0.000 -0.42 -25.94 78 58 479.52 479.52 0.48 55.56 4.922 3.741 4.648 3.826 0.000 0.000 0.000 -0.30 -26.44 80 60 479.84 479.84 0.32 57.13 5.003 3.755 4.722 3.839 0.000 0.000 0.000 -0.11 -26.83 82 62 479.58 479.58 -0.26 58.35 5.084 3.771 4.797 3.855 0.000 0.000 0.000 0.20 -27.20 σ 1.59 1.59 0.017 Z = 22 (Ti) 38 16 279.05 281.25 -2.39 3.192 3.510 3.380 3.600 0.171 0.181 0.177 -18.57 0.93 40 18 314.46 314.46 314.63 35.40 1.43 3.278 3.483 3.392 3.574 0.000 0.000 0.000 -17.53 -0.31 42 20 348.76 348.76 346.89 34.30 5.70 3.354 3.479 3.420 3.570 0.000 0.000 0.000 -15.01 -2.32 44 22 373.09 373.09 375.47 24.33 9.58 3.429 3.473 3.451 3.564 3.612 0.000 0.000 0.000 -11.85 -4.21 46 24 396.14 398.46 398.20 23.05 14.02 3.518 3.491 3.505 3.581 3.607 0.222 0.200 0.211 -11.24 -7.33 48 26 417.05 419.46 418.70 20.91 17.67 3.566 3.478 3.526 3.569 3.592 0.158 0.144 0.152 -10.01 -8.65 50 28 436.72 436.72 437.79 19.67 21.22 3.604 3.463 3.543 3.554 3.570 0.000 0.000 0.000 -8.50 -9.90 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 52 30 450.32 450.32 451.97 13.60 23.19 3.710 3.490 3.619 3.580 0.000 0.000 0.000 -6.77 -10.92 54 32 462.78 462.78 464.38 12.46 25.25 3.806 3.515 3.690 3.605 0.000 0.000 0.000 -6.12 -11.99 56 34 473.90 473.90 474.21 11.12 27.51 3.895 3.546 3.762 3.635 0.000 0.000 0.000 -5.58 -13.15 58 36 484.25 484.25 481.84 10.35 29.88 3.977 3.580 3.831 3.668 0.000 0.000 0.000 -5.24 -14.34 60 38 494.10 494.10 489.17 9.85 32.24 4.051 3.615 3.897 3.702 0.000 0.000 0.000 -4.92 -15.51 62 40 503.48 503.48 9.38 34.65 4.121 3.650 3.961 3.737 0.000 0.000 0.000 -3.75 -16.68 64 42 508.26 508.26 4.78 36.79 4.186 3.674 4.017 3.760 0.000 0.000 0.000 -2.34 -17.82 66 44 512.03 512.03 3.77 38.77 4.252 3.697 4.076 3.783 0.000 0.000 0.000 -1.95 -18.86 68 46 515.60 517.97 3.56 40.94 4.349 3.736 4.160 3.820 0.212 0.166 0.197 -1.83 -20.61 70 48 518.53 520.94 2.93 42.74 4.430 3.756 4.230 3.841 0.237 0.171 0.217 -1.49 -21.48 72 50 520.85 523.23 2.32 44.07 4.507 3.773 4.296 3.857 0.235 0.160 0.212 -1.22 -22.09 74 52 522.68 525.05 1.83 45.05 4.583 3.785 4.361 3.869 0.205 0.137 0.185 -1.03 -22.50 76 54 524.25 526.58 1.57 45.85 4.659 3.794 4.426 3.878 0.152 0.100 0.137 -0.93 -22.78 78 56 525.73 527.84 1.47 46.68 4.740 3.802 4.495 3.885 -0.082 -0.048 -0.072 -0.86 -23.03 80 58 527.09 527.09 1.36 47.57 4.824 3.812 4.568 3.895 0.000 0.000 0.000 -0.74 -23.40 82 60 528.16 528.16 1.07 48.32 4.908 3.825 4.643 3.907 0.000 0.000 0.000 -0.53 -23.81 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 84 62 528.75 528.75 0.58 49.16 4.986 3.842 4.713 3.924 0.000 0.000 0.000 -0.21 -24.21 86 64 528.56 528.56 -0.18 50.04 5.045 3.870 4.772 3.952 0.000 0.000 0.000 0.10 -24.67 σ 2.19 2.06 0.031 Z = 24 (Cr) 42 18 313.96 316.27 -0.50 3.306 3.594 3.474 3.682 -0.155 -0.157 -0.156 -19.01 0.57 44 20 351.51 351.51 349.78 37.55 2.75 3.365 3.566 3.476 3.654 0.000 0.000 0.000 -16.91 -0.95 46 22 380.17 382.51 381.98 28.66 7.08 3.455 3.573 3.517 3.662 0.193 0.228 0.211 -14.93 -3.00 48 24 409.96 412.29 411.47 29.79 13.82 3.535 3.580 3.558 3.669 0.308 0.316 0.312 -13.48 -5.22 50 26 433.62 435.67 435.05 23.66 16.57 3.578 3.562 3.570 3.651 3.659 0.257 0.268 0.262 -11.03 -7.19 52 28 454.84 454.84 456.35 21.22 18.12 3.593 3.522 3.560 3.611 3.645 0.000 0.000 0.000 -10.06 -8.45 54 30 471.72 473.73 474.01 16.88 21.40 3.719 3.585 3.660 3.673 3.689 0.231 0.225 0.229 -8.29 -10.08 56 32 486.33 488.63 488.50 14.61 23.56 3.810 3.616 3.728 3.703 0.225 0.222 0.224 -7.19 -11.31 58 34 499.63 501.97 501.35 13.30 25.74 3.887 3.638 3.786 3.725 0.193 0.196 0.194 -6.59 -12.40 60 36 511.83 514.20 512.41 12.20 27.58 3.956 3.656 3.839 3.743 0.131 0.141 0.135 -6.16 -13.32 62 38 523.61 523.61 522.50 11.78 29.51 4.022 3.675 3.891 3.761 0.000 0.000 0.000 -6.11 -14.22 64 40 535.34 535.34 531.43 11.74 31.87 4.091 3.708 3.951 3.793 0.000 0.000 0.000 -4.94 -15.36 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 66 42 542.47 542.47 7.13 34.21 4.150 3.730 4.002 3.815 0.000 0.000 0.000 -3.47 -16.58 68 44 549.84 551.94 7.37 37.81 4.242 3.782 4.086 3.865 0.225 0.244 0.232 -3.73 -17.91 70 46 556.07 558.23 6.23 40.47 4.315 3.808 4.148 3.892 0.265 0.265 0.265 -2.85 -19.07 72 48 561.01 563.12 4.94 42.48 4.400 3.834 4.219 3.916 0.314 0.280 0.303 -2.30 -20.04 74 50 564.62 566.76 3.61 43.77 4.468 3.852 4.278 3.934 0.311 0.269 0.298 -1.73 -20.86 76 52 567.33 569.56 2.71 44.65 4.539 3.867 4.338 3.949 0.293 0.250 0.279 -1.42 -21.52 78 54 569.55 571.81 2.23 45.30 4.609 3.879 4.397 3.960 0.266 0.225 0.253 -1.22 -22.07 80 56 571.46 573.71 1.91 45.73 4.679 3.886 4.456 3.967 0.219 0.189 0.210 -1.07 -22.49 82 58 573.16 575.42 1.70 46.07 4.752 3.887 4.516 3.969 0.150 0.138 0.147 -0.99 -22.77 84 60 574.78 574.78 1.62 46.62 4.830 3.882 4.579 3.964 0.000 0.000 0.000 -0.93 -22.95 86 62 576.15 576.15 1.37 47.40 4.905 3.901 4.646 3.982 0.000 0.000 0.000 -0.65 -23.37 88 64 576.86 576.86 0.71 48.30 4.963 3.930 4.704 4.010 0.000 0.000 0.000 -0.38 -23.86 90 66 577.21 577.21 0.35 49.36 5.013 3.964 4.756 4.044 0.000 0.000 0.000 -0.20 -24.37 92 68 577.20 577.20 -0.01 50.38 5.063 4.000 4.808 4.079 0.000 0.000 0.000 0.00 -24.90 σ 1.97 1.56 0.022 Z = 26 (Fe) (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 46 20 351.81 351.81 0.30 3.377 3.647 3.532 3.734 0.000 0.000 0.000 -18.70 0.32 48 22 384.00 386.47 385.09 32.19 3.83 3.453 3.635 3.553 3.722 0.144 0.169 0.158 -16.23 -1.22 50 24 416.49 418.55 417.70 32.49 6.53 3.529 3.636 3.585 3.723 0.268 0.270 0.269 -15.41 -2.23 52 26 445.68 447.92 447.70 29.19 12.06 3.567 3.611 3.589 3.699 3.731 0.235 0.240 0.237 -13.20 -4.36 54 28 470.35 470.35 471.76 24.67 15.51 3.584 3.573 3.579 3.662 3.693 0.000 0.000 0.000 -11.65 -7.16 56 30 489.94 491.81 492.26 19.58 18.21 3.704 3.634 3.672 3.721 3.738 0.230 0.224 0.227 -9.68 -7.68 58 32 507.10 509.32 509.95 17.16 20.76 3.797 3.672 3.741 3.758 3.775 0.235 0.228 0.232 -8.50 -8.91 60 34 523.05 525.30 525.35 15.96 23.42 3.875 3.702 3.801 3.788 0.226 0.222 0.224 -7.74 -10.26 62 36 537.22 539.39 538.96 14.17 25.39 3.940 3.718 3.849 3.803 0.169 0.182 0.175 -7.08 -11.59 64 38 550.74 550.74 551.19 13.51 27.13 3.997 3.728 3.890 3.813 0.023 0.025 0.024 -7.27 -13.01 66 40 564.79 564.79 562.43 14.05 29.45 4.065 3.757 3.946 3.841 0.000 0.000 0.000 -6.13 -14.12 68 42 574.40 574.40 9.60 31.92 4.120 3.777 3.992 3.860 0.000 0.000 0.000 -4.66 -15.40 70 44 583.49 585.71 9.09 33.64 4.193 3.812 4.056 3.896 0.165 0.179 0.170 -4.66 -16.06 72 46 591.94 594.06 8.45 35.87 4.256 3.839 4.110 3.922 0.206 0.212 0.208 -3.85 -16.98 74 48 598.66 600.88 6.72 37.66 4.327 3.861 4.169 3.943 0.233 0.222 0.229 -3.18 -17.87 76 50 604.30 606.42 5.64 39.68 4.406 3.884 4.235 3.965 0.269 0.233 0.257 -2.61 -18.64 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 78 52 608.62 610.87 4.33 41.30 4.480 3.903 4.296 3.984 0.268 0.226 0.254 -2.12 -19.40 80 54 612.21 614.46 3.59 42.66 4.551 3.920 4.356 4.001 0.259 0.215 0.245 -1.82 -20.11 82 56 615.24 617.38 3.03 43.78 4.619 3.935 4.414 4.015 0.234 0.197 0.222 -1.54 -20.80 84 58 617.71 619.82 2.47 44.55 4.690 3.945 4.472 4.026 0.190 0.168 0.183 -1.34 -21.43 86 60 619.90 622.05 2.18 45.11 4.763 3.948 4.532 4.029 0.121 0.117 0.120 -1.24 -22.01 88 62 621.97 621.97 2.08 45.82 4.835 3.950 4.591 4.031 0.000 0.000 0.000 -1.11 -22.54 90 64 623.67 623.67 1.69 46.81 4.894 3.980 4.648 4.060 0.000 0.000 0.000 -0.90 -23.02 92 66 625.00 625.00 1.33 47.79 4.946 4.015 4.701 4.094 0.000 0.000 0.000 -0.74 -23.55 94 68 626.08 626.08 1.08 48.89 4.995 4.051 4.753 4.129 0.000 0.000 0.000 -0.55 -24.09 96 70 626.74 626.74 0.66 50.04 5.045 4.087 4.805 4.165 0.000 0.000 0.000 0.04 -24.63 σ 1.91 1.06 0.025 Z = 28 (Ni) 48 20 349.63 349.63 -2.18 3.390 3.732 3.594 3.817 0.000 0.000 0.000 -20.28 1.83 50 22 385.34 385.34 35.71 1.34 3.445 3.683 3.580 3.769 0.000 0.000 0.000 -17.43 -1.90 52 24 419.22 419.22 420.36 33.88 2.73 3.496 3.659 3.585 3.745 0.000 0.000 0.000 -16.66 -0.83 54 26 451.87 451.87 453.22 32.65 6.19 3.539 3.638 3.591 3.725 0.000 0.000 0.000 -16.03 -2.31 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 56 28 483.65 483.65 484.00 31.78 13.30 3.574 3.618 3.596 3.705 0.000 0.000 0.000 -13.29 -3.87 58 30 503.69 503.69 506.46 20.04 13.76 3.670 3.650 3.660 3.737 3.776 0.000 0.000 0.000 -10.07 -5.23 60 32 522.90 525.75 526.85 19.21 15.81 3.772 3.701 3.739 3.787 3.812 -0.149 -0.128 -0.139 -9.86 -6.73 62 34 541.90 544.08 545.26 18.99 18.84 3.870 3.754 3.818 3.838 3.841 -0.231 -0.199 -0.216 -9.09 -8.26 64 36 559.03 561.55 561.76 17.13 21.80 3.916 3.753 3.846 3.838 3.860 -0.127 -0.108 -0.119 -8.66 -9.24 66 38 575.79 575.79 576.81 16.76 25.05 3.974 3.771 3.889 3.855 0.000 0.000 0.000 -8.46 -10.36 68 40 592.02 592.02 590.41 16.23 27.23 4.040 3.797 3.942 3.881 3.892 0.000 0.000 0.000 -7.30 -11.50 70 42 604.22 604.22 602.30 12.20 29.82 4.093 3.815 3.984 3.898 0.000 0.000 0.000 -5.90 -12.73 72 44 615.09 615.09 613.46 10.87 31.60 4.145 3.833 4.027 3.916 0.000 0.000 0.000 -5.36 -13.97 74 46 625.05 625.05 9.96 33.11 4.195 3.851 4.068 3.933 0.000 0.000 0.000 -4.91 -15.18 76 48 634.31 634.31 9.26 35.64 4.242 3.869 4.109 3.951 0.000 0.000 0.000 -4.48 -16.40 78 50 642.86 642.86 8.55 38.56 4.282 3.886 4.144 3.967 0.000 0.000 0.000 -3.37 -17.66 80 52 647.64 647.64 4.79 39.02 4.376 3.903 4.217 3.984 0.000 0.000 0.000 -2.49 -18.09 82 54 652.00 652.00 4.36 39.79 4.463 3.919 4.285 4.000 0.000 0.000 0.000 -2.29 -18.56 84 56 656.06 656.06 4.06 40.82 4.547 3.934 4.352 4.015 0.000 0.000 0.000 -2.12 -19.06 86 58 659.80 659.80 3.74 42.09 4.628 3.950 4.418 4.030 0.000 0.000 0.000 -1.95 -19.56 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 88 60 663.22 663.22 3.42 43.32 4.704 3.967 4.483 4.047 0.000 0.000 0.000 -1.77 -19.98 90 62 666.28 666.28 3.06 44.30 4.773 3.990 4.544 4.069 0.000 0.000 0.000 -1.58 -20.53 92 64 668.93 668.93 2.65 45.26 4.832 4.019 4.600 4.098 0.000 0.000 0.000 -1.40 -21.14 94 66 671.31 671.31 2.38 46.31 4.886 4.054 4.653 4.132 0.000 0.000 0.000 -1.26 -21.73 96 68 673.46 673.46 2.15 47.38 4.936 4.090 4.705 4.167 0.000 0.000 0.000 -1.09 -22.39 98 70 675.22 675.22 1.76 48.47 4.985 4.126 4.755 4.203 0.000 0.000 0.000 -0.45 -23.03 100 72 674.84 674.84 -0.38 49.14 5.049 4.149 4.814 4.225 0.000 0.000 0.000 0.22 -23.56 σ 2.24 1.46 0.024 Z = 30 (Zn) 54 24 417.87 419.99 36.64 -1.34 3.561 3.811 3.702 3.894 0.220 0.244 0.234 -18.03 1.08 56 26 452.81 454.64 34.94 0.94 3.600 3.779 3.697 3.862 0.217 0.243 0.231 -16.35 -0.09 58 28 484.88 484.88 486.96 32.07 1.23 3.609 3.731 3.673 3.816 0.000 0.000 0.000 -14.49 -0.46 60 30 511.89 514.36 514.98 27.01 8.20 3.715 3.768 3.742 3.852 0.216 0.227 0.222 -12.77 -3.03 62 32 533.81 536.25 538.12 21.92 10.90 3.801 3.799 3.800 3.882 3.903 0.222 0.230 0.226 -10.90 -4.49 64 34 554.56 556.73 559.10 20.75 12.66 3.875 3.825 3.851 3.907 3.931 0.222 0.228 0.225 -10.11 -5.89 66 36 573.58 576.57 578.14 19.02 14.55 3.945 3.850 3.902 3.932 3.951 -0.185 -0.180 -0.183 -9.53 -6.84 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 68 38 592.03 594.38 595.39 18.45 16.24 3.994 3.859 3.935 3.941 3.966 -0.117 -0.119 -0.118 -9.07 -7.73 70 40 610.12 610.12 611.09 18.09 18.10 4.048 3.872 3.974 3.954 3.984 0.000 0.000 0.000 -8.46 -8.59 72 42 624.61 624.61 625.81 14.49 20.39 4.101 3.888 4.013 3.969 4.002 0.000 0.000 0.000 -7.05 -9.74 74 44 639.12 641.08 639.56 14.51 24.04 4.172 3.920 4.071 4.001 4.013 0.179 0.196 0.186 -7.20 -11.54 76 46 652.48 653.89 652.25 13.35 27.43 4.223 3.939 4.113 4.019 4.019 0.206 0.214 0.209 -6.06 -12.99 78 48 663.18 665.08 663.58 10.71 28.88 4.266 3.950 4.147 4.030 4.025 0.174 0.187 0.179 -4.95 -13.97 80 50 673.04 673.04 673.88 9.86 30.18 4.284 3.950 4.162 4.030 4.024 0.000 0.000 0.000 -4.33 -14.54 82 52 679.83 681.26 680.69 6.79 32.19 4.387 3.989 4.246 4.068 0.200 0.178 0.192 -3.55 -15.79 84 54 686.23 688.25 6.40 34.22 4.471 4.018 4.315 4.097 0.230 0.197 0.218 -3.15 -16.68 86 56 691.85 693.83 5.62 35.79 4.543 4.042 4.375 4.120 0.243 0.203 0.229 -2.75 -17.48 88 58 696.58 698.55 4.74 36.79 4.611 4.063 4.432 4.141 0.231 0.201 0.221 -2.38 -18.12 90 60 701.17 703.74 4.58 37.95 4.692 4.099 4.503 4.176 -0.240 -0.197 -0.225 -2.29 -18.64 92 62 705.17 707.71 4.01 38.90 4.749 4.115 4.552 4.192 -0.214 -0.179 -0.202 -2.03 -19.23 94 64 708.73 711.16 3.55 39.80 4.803 4.131 4.599 4.208 -0.178 -0.157 -0.171 -1.81 -19.74 96 66 711.91 714.26 3.18 40.60 4.854 4.142 4.643 4.218 -0.114 -0.114 -0.114 -1.73 -20.07 98 68 715.22 715.22 3.31 41.76 4.902 4.157 4.687 4.233 0.000 0.000 0.000 -1.86 -20.40 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 100 70 718.56 718.56 3.33 43.34 4.953 4.189 4.737 4.265 0.000 0.000 0.000 -1.18 -21.11 102 72 719.45 719.45 0.89 44.61 4.999 4.215 4.782 4.291 0.000 0.000 0.000 -0.37 -21.83 104 74 719.93 722.02 0.48 46.05 5.070 4.249 4.848 4.324 0.147 0.159 0.150 -0.61 -22.76 106 76 720.89 723.03 0.96 47.61 5.145 4.277 4.915 4.351 0.216 0.201 0.212 -0.49 -23.31 108 78 721.50 723.61 0.61 48.26 5.219 4.302 4.981 4.376 0.265 0.223 0.253 -0.29 -23.68 110 80 721.63 723.81 0.13 48.87 5.290 4.325 5.045 4.398 0.293 0.238 0.278 -0.07 -24.03 112 82 721.40 723.63 -0.23 49.40 5.365 4.346 5.112 4.419 0.314 0.250 0.297 0.08 -24.35 σ 2.62 1.47 0.020 Z = 32 (Ge) 60 28 484.28 487.05 -0.59 3.654 3.844 3.757 3.926 -0.095 -0.125 -0.111 -15.79 0.30 62 30 514.01 516.47 29.72 2.12 3.752 3.867 3.812 3.949 0.221 0.235 0.228 -14.19 -0.81 64 32 539.68 542.65 545.84 25.67 5.87 3.833 3.891 3.862 3.973 0.230 0.240 0.235 -12.69 -2.57 66 34 564.83 567.82 569.28 25.15 10.27 3.915 3.924 3.919 4.005 -0.252 -0.251 -0.252 -11.88 -4.68 68 36 585.99 589.27 590.79 21.16 12.41 3.974 3.937 3.957 4.018 -0.233 -0.236 -0.234 -10.47 -5.78 70 38 606.14 608.97 610.52 20.16 14.11 4.019 3.943 3.985 4.023 4.041 -0.178 -0.191 -0.184 -9.99 -6.69 72 40 625.72 625.72 628.69 19.58 15.60 4.057 3.940 4.005 4.021 4.058 0.000 0.000 0.000 -9.61 -7.41 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 74 42 642.55 642.55 645.66 16.83 17.94 4.109 3.954 4.043 4.034 4.074 0.013 0.017 0.015 -8.22 -8.57 76 44 659.49 661.84 661.60 16.94 20.37 4.175 3.982 4.095 4.061 4.081 0.164 0.183 0.172 -8.29 -9.66 78 46 675.32 677.39 676.39 15.82 22.84 4.225 3.998 4.133 4.077 0.186 0.201 0.192 -7.41 -10.83 80 48 689.01 690.95 690.21 13.69 25.83 4.264 4.008 4.164 4.087 0.164 0.184 0.172 -6.11 -12.21 82 50 700.65 700.65 702.23 11.64 27.61 4.286 4.007 4.179 4.086 0.000 0.000 0.000 -5.30 -13.28 84 52 708.93 711.08 711.10 8.28 29.10 4.387 4.047 4.260 4.125 0.187 0.176 0.183 -4.45 -13.85 86 54 717.04 719.48 718.50 8.11 30.81 4.464 4.078 4.324 4.156 0.229 0.201 0.219 -4.04 -14.74 88 56 724.48 726.83 7.44 32.63 4.534 4.106 4.383 4.183 0.250 0.213 0.237 -3.58 -15.66 90 58 731.24 733.75 6.76 34.66 4.619 4.143 4.455 4.219 -0.269 -0.230 -0.255 -3.42 -16.73 92 60 737.19 739.89 5.95 36.02 4.676 4.163 4.504 4.240 -0.258 -0.223 -0.246 -2.92 -17.42 94 62 742.43 745.16 5.24 37.25 4.730 4.182 4.551 4.258 -0.241 -0.213 -0.231 -2.65 -18.07 96 64 747.16 749.74 4.74 38.44 4.783 4.203 4.598 4.279 -0.225 -0.204 -0.218 -2.35 -18.71 98 66 751.24 753.76 4.08 39.33 4.833 4.223 4.642 4.298 -0.200 -0.191 -0.197 -2.05 -19.28 100 68 754.90 757.18 3.65 39.68 4.875 4.221 4.676 4.296 -0.078 -0.094 -0.083 -2.21 -19.47 102 70 759.49 759.49 4.60 40.94 4.924 4.241 4.720 4.316 0.000 0.000 0.000 -1.91 -20.04 104 72 761.89 761.89 2.39 42.44 4.966 4.268 4.762 4.342 0.000 0.000 0.000 -1.07 -20.80 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 106 74 763.89 766.15 2.01 43.96 5.023 4.300 4.816 4.374 0.119 0.146 0.127 -1.17 -21.41 108 76 765.87 768.10 1.98 44.99 5.082 4.327 4.871 4.400 0.171 0.181 0.174 -0.95 -21.95 110 78 767.36 769.55 1.49 45.86 5.151 4.349 4.931 4.422 0.220 0.201 0.214 -0.73 -22.42 112 80 768.43 770.55 1.07 46.80 5.221 4.369 4.993 4.442 0.258 0.214 0.245 -0.50 -22.88 114 82 769.03 771.22 0.60 47.63 5.289 4.388 5.052 4.460 0.281 0.222 0.264 -0.29 -23.33 116 84 769.26 771.43 0.23 48.37 5.358 4.406 5.113 4.478 0.297 0.226 0.277 -0.13 -23.74 118 86 769.13 771.29 -0.13 49.11 5.424 4.422 5.171 4.494 0.301 0.227 0.281 0.04 -24.15 σ 3.35 1.84 0.030 Z = 34 (Se) 64 30 514.08 516.32 0.08 3.783 3.955 3.875 4.035 0.221 0.235 0.229 -15.53 0.36 66 32 544.02 546.99 29.93 4.34 3.873 3.987 3.932 4.066 -0.242 -0.266 -0.255 -14.79 -1.36 68 34 572.94 575.95 576.44 28.92 8.11 3.934 3.997 3.966 4.076 -0.259 -0.270 -0.265 -13.26 -2.75 70 36 596.35 599.46 600.32 23.40 10.36 3.999 4.010 4.004 4.089 -0.262 -0.269 -0.266 -11.49 -3.97 72 38 618.36 621.16 622.40 22.02 12.22 4.050 4.020 4.036 4.099 -0.241 -0.254 -0.247 -10.91 -5.06 74 40 639.32 641.86 642.89 20.95 13.60 4.095 4.028 4.065 4.107 4.070 -0.213 -0.228 -0.220 -10.29 -6.27 76 42 658.75 661.35 662.07 19.44 16.20 4.146 4.040 4.099 4.119 4.140 -0.213 -0.227 -0.219 -9.39 -7.39 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 78 44 677.20 679.54 679.99 18.44 17.70 4.179 4.037 4.118 4.116 4.141 0.146 0.166 0.155 -9.35 -8.30 80 46 695.32 697.44 696.87 18.13 20.01 4.228 4.053 4.154 4.131 4.140 0.176 0.194 0.183 -8.64 -9.28 82 48 711.68 713.71 712.84 16.36 22.67 4.269 4.063 4.184 4.141 4.140 0.164 0.188 0.174 -7.15 -10.40 84 50 725.79 725.79 727.34 14.11 25.14 4.290 4.058 4.197 4.136 0.000 0.000 0.000 -6.33 -11.96 86 52 735.11 737.44 738.04 9.32 26.18 4.391 4.103 4.279 4.180 -0.183 -0.195 -0.188 -5.26 -12.41 88 54 745.04 747.64 747.56 9.93 28.00 4.467 4.136 4.342 4.213 -0.222 -0.218 -0.220 -5.02 -13.24 90 56 754.57 757.22 755.62 9.53 30.10 4.539 4.167 4.402 4.243 -0.252 -0.233 -0.245 -4.75 -14.09 92 58 763.47 765.92 8.89 32.22 4.607 4.195 4.459 4.270 -0.276 -0.243 -0.264 -4.18 -14.91 94 60 770.76 773.41 7.30 33.58 4.663 4.217 4.507 4.292 -0.271 -0.241 -0.260 -3.58 -15.61 96 62 777.30 779.96 6.53 34.87 4.716 4.238 4.553 4.313 -0.261 -0.237 -0.252 -3.29 -16.30 98 64 783.34 785.85 6.05 36.18 4.768 4.260 4.598 4.335 -0.253 -0.233 -0.246 -3.01 -17.01 100 66 788.74 791.14 5.39 37.49 4.818 4.283 4.643 4.358 -0.247 -0.231 -0.241 -2.64 -17.74 102 68 793.32 795.74 4.58 38.42 4.864 4.302 4.684 4.375 -0.224 -0.219 -0.223 -2.32 -18.40 104 70 797.40 799.55 4.08 37.90 4.910 4.318 4.725 4.392 -0.200 -0.210 -0.204 -2.09 -18.99 106 72 802.29 802.29 4.90 40.41 4.939 4.312 4.747 4.386 0.000 0.000 0.000 -1.81 -19.76 108 74 805.46 807.74 3.17 41.57 4.985 4.339 4.791 4.412 0.074 0.094 0.080 -1.66 -20.35 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 110 76 808.50 810.70 3.04 42.62 5.035 4.366 4.838 4.439 0.126 0.143 0.131 -1.47 -20.80 112 78 810.98 813.16 2.48 43.62 5.090 4.389 4.888 4.461 0.164 0.169 0.165 -1.15 -21.26 114 80 812.90 815.00 1.92 44.46 5.163 4.409 4.950 4.481 0.218 0.195 0.211 -0.94 -21.59 116 82 814.38 816.52 1.49 45.35 5.232 4.428 5.009 4.499 0.251 0.209 0.239 -0.72 -21.95 118 84 815.49 817.67 1.11 46.23 5.298 4.446 5.067 4.517 0.273 0.219 0.258 -0.55 -22.32 120 86 816.27 818.41 0.78 47.14 5.362 4.463 5.124 4.534 0.286 0.223 0.269 -0.37 -22.68 122 88 816.67 818.88 0.39 47.97 5.425 4.479 5.179 4.550 0.288 0.225 0.270 -0.19 -23.03 124 90 816.91 818.99 0.25 48.89 5.489 4.495 5.236 4.566 -0.277 -0.221 -0.262 -0.29 -23.54 126 92 816.48 818.67 -0.44 49.02 5.549 4.509 5.289 4.579 0.273 0.221 0.259 0.11 -23.69 σ 2.86 0.95 0.022 Z = 36 (Kr) 68 32 543.93 547.25 -0.09 3.896 4.061 3.984 4.139 -0.239 -0.259 -0.249 -15.92 0.42 70 34 575.13 578.28 31.21 2.19 3.957 4.073 4.017 4.151 -0.264 -0.283 -0.273 -14.51 -0.63 72 36 602.27 605.21 606.91 27.13 5.92 4.040 4.102 4.071 4.179 4.164 -0.332 -0.344 -0.338 -12.95 -2.13 74 38 626.76 629.80 631.44 24.50 8.40 4.123 4.142 4.133 4.219 4.187 0.474 0.480 0.477 -12.50 -4.47 76 40 650.34 650.34 654.27 23.58 11.03 4.080 4.065 4.073 4.143 4.202 0.000 0.000 0.000 -11.87 -5.24 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 78 42 671.79 671.79 675.58 21.45 13.04 4.129 4.071 4.102 4.149 4.204 0.000 0.000 0.000 -10.48 -6.39 80 44 692.29 694.56 695.43 20.50 15.09 4.180 4.084 4.137 4.162 4.197 0.091 0.100 0.095 -10.14 -7.21 82 46 712.08 714.22 714.28 19.79 16.75 4.227 4.097 4.170 4.174 4.192 0.132 0.137 0.134 -9.61 -7.98 84 48 730.50 732.29 732.27 18.42 18.82 4.266 4.104 4.197 4.181 4.188 0.123 0.131 0.126 -8.61 -9.03 86 50 748.06 748.06 749.23 17.55 22.27 4.293 4.103 4.215 4.180 4.184 0.000 0.000 0.000 -7.24 -10.48 88 52 758.39 760.95 761.80 10.34 23.28 4.372 4.134 4.276 4.210 4.217 -0.107 -0.109 -0.108 -5.57 -11.20 90 54 769.21 771.96 773.21 10.82 24.16 4.452 4.174 4.343 4.250 4.242 -0.183 -0.176 -0.180 -5.59 -11.63 92 56 780.12 782.96 783.17 10.91 25.54 4.531 4.222 4.413 4.297 4.272 -0.249 -0.240 -0.245 -5.50 -12.18 94 58 790.64 793.33 791.89 10.52 27.17 4.602 4.260 4.474 4.334 4.300 -0.287 -0.274 -0.282 -5.03 -12.89 96 60 799.88 802.58 799.76 9.24 29.12 4.666 4.299 4.532 4.372 4.327 -0.319 -0.305 -0.314 -4.36 -13.86 98 62 807.76 810.61 7.88 30.46 4.716 4.318 4.574 4.392 -0.309 -0.297 -0.304 -3.94 -14.61 100 64 815.10 817.69 7.34 31.75 4.745 4.296 4.588 4.370 -0.219 -0.196 -0.211 -3.82 -15.42 102 66 822.04 824.56 6.94 33.30 4.791 4.313 4.628 4.387 -0.201 -0.183 -0.195 -3.41 -16.24 104 68 828.32 830.75 6.29 35.00 4.832 4.321 4.661 4.394 -0.137 -0.135 -0.136 -3.25 -17.20 106 70 835.13 835.13 6.81 37.74 4.876 4.327 4.697 4.400 0.000 0.000 0.000 -3.30 -17.92 108 72 840.56 840.56 5.43 38.27 4.916 4.350 4.735 4.423 0.000 0.000 0.000 -2.53 -18.62 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 110 74 845.02 845.02 4.46 39.56 4.956 4.372 4.773 4.445 0.000 0.000 0.000 -2.20 -19.30 112 76 849.00 851.12 3.98 40.50 4.997 4.396 4.812 4.468 0.059 0.067 0.062 -1.98 -19.84 114 78 852.56 854.60 3.56 41.58 5.038 4.419 4.851 4.491 0.081 0.086 0.083 -1.68 -20.40 116 80 855.47 855.47 2.91 42.57 5.069 4.439 4.882 4.510 0.000 0.000 0.000 -1.45 -21.13 118 82 857.98 857.98 2.51 43.60 5.096 4.463 4.912 4.534 0.000 0.000 0.000 -0.88 -21.74 120 84 859.01 859.01 1.03 43.52 5.180 4.470 4.978 4.541 0.000 0.000 0.000 -0.55 -22.00 122 86 860.02 861.98 1.01 43.75 5.286 4.485 5.063 4.556 0.194 0.131 0.176 -0.64 -21.85 124 88 861.17 863.21 1.15 44.50 5.358 4.499 5.124 4.570 -0.201 -0.149 -0.186 -0.64 -22.16 126 90 862.16 864.19 0.99 45.25 5.426 4.519 5.183 4.589 -0.228 -0.167 -0.211 -0.54 -22.35 128 92 862.48 863.96 0.32 46.00 5.504 4.581 5.261 4.651 -0.306 -0.249 -0.290 -0.40 -22.43 130 94 863.47 865.57 1.00 46.45 5.542 4.560 5.288 4.629 -0.249 -0.184 -0.231 -0.28 -22.90 132 96 863.72 865.77 0.24 47.15 5.596 4.572 5.336 4.642 -0.240 -0.178 -0.223 -0.15 -23.25 134 98 863.71 865.68 -0.01 47.91 5.648 4.584 5.383 4.653 -0.226 -0.169 -0.211 -0.02 -23.62 σ 3.17 1.96 0.032 Z = 38 (Sr) 72 34 574.88 577.83 -0.25 3.975 4.137 4.061 4.214 -0.254 -0.266 -0.261 -15.60 0.45 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 74 36 604.31 607.21 29.43 2.04 4.086 4.196 4.143 4.271 0.457 0.492 0.475 -15.43 -1.13 76 38 634.57 637.39 637.94 30.26 7.81 4.139 4.202 4.171 4.278 0.480 0.498 0.489 -13.84 -2.46 78 40 659.26 662.20 663.01 24.69 8.92 4.191 4.209 4.199 4.284 4.256 0.488 0.496 0.492 -11.64 -4.02 80 42 682.93 682.93 686.29 23.67 11.14 4.139 4.122 4.131 4.199 4.256 0.000 0.000 0.000 -11.66 -5.37 82 44 705.55 705.55 708.13 22.62 13.26 4.184 4.131 4.159 4.207 4.248 0.000 0.000 0.000 -11.00 -6.18 84 46 726.88 726.88 728.91 21.33 14.80 4.225 4.136 4.185 4.213 4.239 -0.025 -0.027 -0.026 -10.52 -7.12 86 48 747.42 747.42 748.93 20.54 16.92 4.263 4.141 4.210 4.218 4.231 0.000 0.000 0.000 -10.09 -8.08 88 50 767.31 767.31 768.47 19.89 19.25 4.298 4.146 4.233 4.223 4.224 0.000 0.000 0.000 -8.12 -8.96 90 52 779.40 781.56 782.64 12.10 21.01 4.366 4.170 4.285 4.246 4.261 -0.058 -0.057 -0.057 -6.22 -9.81 92 54 791.43 793.86 795.70 12.03 22.22 4.436 4.199 4.340 4.275 4.292 -0.121 -0.112 -0.117 -6.12 -10.48 94 56 803.16 805.82 807.82 11.73 23.04 4.514 4.249 4.409 4.324 4.319 -0.207 -0.193 -0.202 -6.07 -11.14 96 58 815.01 817.81 818.04 11.85 24.38 4.660 4.387 4.554 4.459 4.352 0.498 0.480 0.491 -5.85 -12.33 98 60 825.81 828.57 827.68 10.80 25.93 4.696 4.397 4.582 4.469 4.438 0.477 0.464 0.472 -5.23 -13.11 100 62 835.54 838.26 837.22 9.73 27.78 4.737 4.409 4.615 4.481 4.464 0.457 0.450 0.454 -4.76 -13.84 102 64 844.84 847.31 845.70 9.30 29.74 4.724 4.324 4.579 4.397 -0.182 -0.153 -0.171 -4.64 -14.28 104 66 853.47 855.91 8.63 31.43 4.768 4.337 4.616 4.410 -0.148 -0.128 -0.141 -4.28 -14.97 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 106 68 861.18 863.26 7.71 32.86 4.807 4.342 4.646 4.415 0.000 0.000 0.000 -4.52 -16.02 108 70 869.69 869.69 8.51 34.56 4.857 4.362 4.688 4.435 0.000 0.000 0.000 -3.95 -16.63 110 72 876.46 876.46 6.77 35.90 4.896 4.382 4.725 4.454 0.000 0.000 0.000 -3.21 -17.30 112 74 882.23 882.23 5.77 37.21 4.934 4.402 4.760 4.474 0.000 0.000 0.000 -2.84 -17.95 114 76 887.38 887.38 5.15 38.38 4.972 4.422 4.796 4.494 0.000 0.000 0.000 -2.56 -18.58 116 78 892.07 892.07 4.69 39.51 5.009 4.443 4.831 4.514 0.000 0.000 0.000 -2.31 -19.19 118 80 896.30 896.30 4.24 40.84 5.044 4.463 4.865 4.534 0.000 0.000 0.000 -2.02 -19.78 120 82 900.02 900.02 3.71 42.04 5.073 4.484 4.894 4.555 0.000 0.000 0.000 -1.33 -20.41 122 84 901.66 901.66 1.64 42.65 5.148 4.493 4.954 4.564 0.000 0.000 0.000 -0.88 -20.72 124 86 903.09 904.94 1.44 43.08 5.226 4.505 5.016 4.576 -0.090 -0.066 -0.083 -0.87 -20.93 126 88 904.64 906.50 1.54 43.47 5.302 4.520 5.079 4.590 -0.142 -0.099 -0.129 -0.86 -21.12 128 90 906.08 907.95 1.44 43.92 5.370 4.535 5.136 4.605 -0.169 -0.114 -0.153 -0.78 -21.40 130 92 907.33 909.26 1.25 44.86 5.431 4.553 5.190 4.623 -0.187 -0.124 -0.169 -0.68 -21.69 132 94 908.39 910.35 1.06 44.92 5.487 4.573 5.241 4.642 -0.199 -0.133 -0.180 -0.59 -22.00 134 96 909.29 911.25 0.90 45.57 5.541 4.591 5.289 4.660 -0.201 -0.136 -0.183 -0.49 -22.31 136 98 910.01 911.95 0.72 46.30 5.591 4.606 5.334 4.675 -0.193 -0.132 -0.176 -0.39 -22.61 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 138 100 910.50 912.44 0.50 47.07 5.639 4.620 5.378 4.689 -0.178 -0.125 -0.163 -0.29 -22.92 140 102 910.81 912.70 0.30 47.84 5.686 4.634 5.421 4.702 -0.157 -0.117 -0.146 -0.19 -23.23 142 104 910.91 912.74 0.10 48.55 5.732 4.648 5.463 4.716 -0.131 -0.109 -0.125 -0.08 -23.53 144 106 910.79 912.60 -0.12 49.14 5.777 4.660 5.505 4.728 -0.090 -0.092 -0.091 -0.01 -23.89 σ 2.90 1.68 0.041 Z = 40 (Zr) 76 36 604.50 607.21 0.19 4.029 4.184 4.111 4.260 -0.176 -0.183 -0.180 -15.87 0.40 78 38 636.16 639.25 31.66 1.58 4.157 4.267 4.214 4.341 0.480 0.505 0.493 -15.21 -0.06 80 40 666.35 666.35 30.20 7.09 4.107 4.180 4.144 4.255 0.000 0.000 0.000 -14.11 -2.30 82 42 692.00 692.00 694.17 25.65 9.07 4.153 4.181 4.167 4.257 0.000 0.000 0.000 -12.53 -3.32 84 44 716.14 716.14 718.12 24.14 10.58 4.195 4.183 4.189 4.259 0.000 0.000 0.000 -11.94 -4.36 86 46 739.29 739.29 740.81 23.16 12.41 4.234 4.186 4.212 4.262 0.000 0.000 0.000 -11.45 -5.37 88 48 761.66 761.66 762.61 22.36 14.24 4.270 4.189 4.233 4.265 4.279 0.000 0.000 0.000 -11.02 -6.37 90 50 783.47 783.47 783.90 21.81 16.16 4.303 4.192 4.254 4.267 4.269 0.000 0.000 0.000 -9.09 -7.38 92 52 797.31 797.31 799.73 13.84 17.90 4.367 4.212 4.300 4.287 4.306 0.000 0.000 0.000 -7.00 -8.23 94 54 810.67 810.67 814.68 13.36 19.23 4.427 4.231 4.345 4.306 4.332 0.000 0.000 0.000 -6.73 -9.07 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 96 56 824.11 826.58 828.99 13.45 20.95 4.506 4.288 4.417 4.362 4.351 -0.194 -0.184 -0.190 -6.83 -9.81 98 58 837.12 839.59 840.98 13.01 22.11 4.567 4.315 4.466 4.389 4.401 -0.216 -0.198 -0.209 -6.46 -10.61 100 60 849.40 851.95 852.21 12.28 23.59 4.620 4.337 4.509 4.410 4.489 -0.217 -0.198 -0.209 -6.10 -11.40 102 62 860.99 863.59 863.56 11.59 25.45 4.669 4.357 4.549 4.430 4.529 -0.213 -0.193 -0.205 -5.76 -12.17 104 64 871.91 874.44 873.84 10.92 27.07 4.717 4.379 4.590 4.451 -0.211 -0.191 -0.204 -5.36 -12.93 106 66 881.95 884.40 10.03 28.48 4.764 4.402 4.631 4.474 -0.216 -0.196 -0.208 -4.88 -13.74 108 68 891.46 891.46 9.51 30.28 4.794 4.379 4.645 4.451 0.000 0.000 0.000 -5.16 -14.19 110 70 901.23 901.23 9.77 31.54 4.842 4.397 4.685 4.469 0.000 0.000 0.000 -4.59 -14.81 112 72 909.34 909.34 8.11 32.88 4.881 4.416 4.720 4.488 0.000 0.000 0.000 -3.88 -15.52 114 74 916.40 916.40 7.06 34.17 4.919 4.435 4.754 4.506 0.000 0.000 0.000 -3.49 -16.24 116 76 922.86 922.86 6.46 35.48 4.955 4.453 4.788 4.525 0.000 0.000 0.000 -3.20 -16.94 118 78 928.80 928.80 5.94 36.74 4.991 4.472 4.821 4.543 0.000 0.000 0.000 -2.94 -17.63 120 80 934.31 934.31 5.51 38.01 5.025 4.491 4.853 4.562 0.000 0.000 0.000 -2.66 -18.32 122 82 939.36 939.36 5.05 39.34 5.054 4.511 4.883 4.582 0.000 0.000 0.000 -1.84 -19.05 124 84 941.66 941.66 2.30 40.00 5.123 4.522 4.937 4.592 0.000 0.000 0.000 -1.21 -19.33 126 86 943.70 943.70 2.04 40.60 5.187 4.532 4.989 4.602 0.000 0.000 0.000 -1.11 -19.64 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 128 88 945.59 945.59 1.89 40.95 5.252 4.543 5.041 4.613 0.000 0.000 0.000 -1.04 -19.95 130 90 947.38 947.38 1.79 41.30 5.315 4.553 5.093 4.622 0.000 0.000 0.000 -0.99 -20.24 132 92 949.08 949.08 1.70 41.75 5.378 4.563 5.145 4.632 0.000 0.000 0.000 -0.93 -20.53 134 94 951.16 953.14 2.07 42.77 5.449 4.635 5.219 4.703 -0.228 -0.176 -0.213 -0.92 -20.86 136 96 952.70 954.71 1.54 43.41 5.500 4.653 5.265 4.721 -0.228 -0.176 -0.213 -0.79 -21.19 138 98 953.97 955.96 1.27 43.96 5.549 4.670 5.310 4.738 -0.224 -0.174 -0.210 -0.66 -21.50 140 100 954.98 956.95 1.01 44.47 5.596 4.686 5.352 4.754 -0.213 -0.169 -0.200 -0.52 -21.78 142 102 955.77 955.77 0.79 44.96 5.643 4.636 5.378 4.704 0.000 0.000 0.000 -0.62 -22.03 144 104 956.79 956.79 1.02 45.88 5.684 4.656 5.418 4.725 0.000 0.000 0.000 -0.57 -22.36 146 106 957.67 957.67 0.89 46.89 5.723 4.678 5.457 4.746 0.000 0.000 0.000 -0.51 -22.71 148 108 958.47 958.47 0.80 47.83 5.759 4.699 5.493 4.767 0.000 0.000 0.000 -0.43 -23.03 150 110 959.13 959.13 0.66 48.55 5.795 4.725 5.530 4.792 0.000 0.000 0.000 -0.30 -23.42 152 112 959.44 959.44 0.31 49.27 5.831 4.750 5.567 4.816 0.000 0.000 0.000 0.20 -23.78 σ 2.75 1.87 0.047 Z = 42 (Mo) 80 38 635.98 635.98 -0.18 4.072 4.228 4.155 4.303 0.000 0.000 0.000 -16.65 0.56 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 82 40 668.26 668.26 32.28 1.91 4.116 4.232 4.176 4.307 0.000 0.000 0.000 -15.14 -0.41 84 42 696.21 696.21 27.95 4.21 4.160 4.231 4.196 4.306 0.000 0.000 0.000 -13.69 -1.56 86 44 722.69 722.69 725.39 26.48 6.55 4.201 4.232 4.216 4.307 0.000 0.000 0.000 -13.07 -2.70 88 46 748.08 748.08 750.10 25.39 8.78 4.239 4.233 4.236 4.308 0.000 0.000 0.000 -12.56 -3.82 90 48 772.66 772.66 773.73 24.58 11.00 4.274 4.234 4.256 4.309 4.327 0.000 0.000 0.000 -12.10 -4.95 92 50 796.55 796.55 796.51 23.90 13.09 4.306 4.235 4.274 4.310 4.315 0.000 0.000 0.000 -10.03 -6.06 94 52 812.05 812.05 814.26 15.49 14.74 4.368 4.256 4.318 4.330 4.353 0.000 0.000 0.000 -7.78 -6.81 96 54 826.95 829.08 830.78 14.91 16.29 4.440 4.299 4.378 4.372 4.385 0.168 0.151 0.161 -7.81 -7.99 98 56 842.19 844.01 846.25 15.24 18.08 4.505 4.342 4.436 4.415 4.409 0.243 0.228 0.237 -7.45 -8.81 100 58 856.69 859.21 860.47 14.50 19.57 4.563 4.360 4.479 4.433 4.447 -0.218 -0.207 -0.213 -7.26 -9.08 102 60 870.57 873.16 873.98 13.89 21.18 4.616 4.384 4.522 4.456 4.491 -0.225 -0.211 -0.219 -6.89 -9.87 104 62 883.75 886.36 886.90 13.18 22.76 4.665 4.406 4.562 4.478 4.525 -0.226 -0.212 -0.220 -6.55 -10.66 106 64 896.30 898.85 898.83 12.55 24.39 4.712 4.428 4.601 4.499 4.549 -0.229 -0.214 -0.223 -6.17 -11.46 108 66 908.03 910.44 909.59 11.72 26.08 4.758 4.450 4.641 4.521 4.560 -0.234 -0.218 -0.228 -5.69 -12.27 110 68 918.62 921.02 919.52 10.60 27.16 4.801 4.469 4.677 4.540 -0.230 -0.217 -0.225 -5.14 -13.05 112 70 928.88 928.88 10.26 27.66 4.827 4.439 4.685 4.510 0.000 0.000 0.000 -5.28 -13.30 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 114 72 938.52 938.52 9.63 29.18 4.866 4.456 4.719 4.527 0.000 0.000 0.000 -4.65 -14.04 116 74 947.16 947.16 8.64 30.76 4.903 4.473 4.752 4.544 0.000 0.000 0.000 -4.26 -14.83 118 76 955.12 955.12 7.96 32.26 4.939 4.491 4.784 4.561 0.000 0.000 0.000 -3.95 -15.60 120 78 962.57 962.57 7.45 33.76 4.973 4.508 4.816 4.578 0.000 0.000 0.000 -3.68 -16.37 122 80 969.55 969.55 6.99 35.24 5.006 4.525 4.846 4.596 0.000 0.000 0.000 -3.40 -17.13 124 82 976.13 976.13 6.58 36.78 5.037 4.543 4.875 4.613 0.000 0.000 0.000 -2.36 -17.91 126 84 978.99 978.99 2.85 37.33 5.100 4.556 4.925 4.626 0.000 0.000 0.000 -1.50 -18.18 128 86 981.61 981.61 2.62 37.91 5.161 4.568 4.974 4.638 0.000 0.000 0.000 -1.39 -18.46 130 88 984.05 984.05 2.44 38.47 5.221 4.581 5.023 4.650 0.000 0.000 0.000 -1.31 -18.73 132 90 986.37 988.08 2.32 38.99 5.284 4.595 5.075 4.664 0.069 0.038 0.059 -1.25 -19.07 134 92 989.08 991.09 2.71 40.00 5.362 4.658 5.152 4.726 -0.219 -0.179 -0.207 -1.42 -19.30 136 94 991.60 993.64 2.52 40.44 5.416 4.682 5.200 4.750 -0.233 -0.190 -0.219 -1.27 -19.65 138 96 993.80 995.90 2.20 41.10 5.466 4.702 5.245 4.769 -0.235 -0.193 -0.222 -1.13 -20.00 140 98 995.76 997.84 1.96 41.79 5.514 4.721 5.289 4.789 -0.234 -0.193 -0.222 -1.00 -20.36 142 100 997.44 999.47 1.69 42.46 5.560 4.740 5.330 4.807 -0.229 -0.191 -0.218 -0.83 -20.71 144 102 998.74 1000.80 1.29 42.97 5.603 4.755 5.369 4.822 -0.214 -0.184 -0.206 -0.66 -21.04 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 146 104 999.73 1001.81 0.99 42.94 5.644 4.765 5.406 4.831 -0.187 -0.166 -0.181 -0.55 -21.35 148 106 1001.29 1001.29 1.55 43.61 5.680 4.726 5.427 4.794 0.000 0.000 0.000 -0.87 -21.43 150 108 1002.83 1002.83 1.54 44.36 5.719 4.748 5.464 4.815 0.000 0.000 0.000 -0.81 -21.79 152 110 1004.25 1004.25 1.42 45.12 5.757 4.770 5.502 4.837 0.000 0.000 0.000 -0.69 -22.14 154 112 1005.36 1005.36 1.11 45.91 5.794 4.793 5.539 4.859 0.000 0.000 0.000 -0.18 -22.50 156 114 1004.69 1004.69 -0.66 46.53 5.831 4.813 5.575 4.879 0.000 0.000 0.000 0.41 -22.91 σ 2.69 1.54 0.030 Z = 44 (Ru) 84 40 667.65 667.65 -0.61 4.127 4.283 4.209 4.357 0.000 0.000 0.000 -16.14 0.70 86 42 697.91 697.91 30.26 1.70 4.169 4.280 4.226 4.354 0.000 0.000 0.000 -14.82 -0.44 88 44 726.81 728.66 28.90 4.12 4.222 4.294 4.258 4.368 0.148 0.152 0.150 -14.69 -2.00 90 46 754.93 756.73 756.88 28.12 6.85 4.253 4.287 4.269 4.361 0.129 0.129 0.129 -13.63 -3.05 92 48 781.30 783.08 782.44 26.37 8.64 4.280 4.280 4.280 4.354 0.070 0.071 0.070 -13.05 -3.93 94 50 807.32 807.32 806.86 26.02 10.76 4.309 4.277 4.294 4.351 0.000 0.000 0.000 -10.97 -4.94 96 52 824.34 824.34 826.50 17.02 12.29 4.369 4.298 4.336 4.371 4.391 0.000 0.000 0.000 -8.54 -5.71 98 54 841.72 843.81 844.79 17.38 14.77 4.442 4.342 4.398 4.415 4.423 0.175 0.162 0.169 -8.69 -6.82 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 100 56 858.55 860.72 861.94 16.83 16.36 4.502 4.373 4.446 4.446 4.453 0.216 0.199 0.208 -8.27 -7.63 102 58 874.13 876.51 877.96 15.57 17.44 4.553 4.395 4.486 4.467 4.481 0.220 0.203 0.213 -7.66 -8.43 104 60 888.74 891.43 893.09 14.62 18.17 4.612 4.425 4.534 4.497 4.510 -0.226 -0.213 -0.221 -7.66 -8.47 106 62 903.50 906.22 907.46 14.76 19.75 4.661 4.447 4.573 4.518 -0.231 -0.217 -0.225 -7.33 -9.22 108 64 917.62 920.29 920.94 14.12 21.31 4.707 4.469 4.611 4.540 -0.234 -0.220 -0.229 -6.96 -9.98 110 66 930.93 933.47 933.49 13.32 22.91 4.751 4.489 4.648 4.560 -0.238 -0.223 -0.232 -6.48 -10.75 112 68 943.15 945.60 945.20 12.21 24.52 4.794 4.509 4.684 4.579 -0.237 -0.223 -0.232 -5.87 -11.51 114 70 954.24 954.24 955.93 11.09 25.35 4.813 4.477 4.686 4.548 0.000 0.000 0.000 -5.96 -12.28 116 72 965.36 965.36 965.92 11.12 26.84 4.853 4.493 4.720 4.564 0.000 0.000 0.000 -5.43 -13.02 118 74 975.55 975.55 10.19 28.39 4.889 4.509 4.751 4.580 0.000 0.000 0.000 -5.04 -13.80 120 76 985.11 985.11 9.56 29.99 4.924 4.526 4.782 4.596 0.000 0.000 0.000 -4.73 -14.58 122 78 994.12 994.12 9.01 31.55 4.958 4.542 4.812 4.612 0.000 0.000 0.000 -4.45 -15.36 124 80 1002.68 1002.68 8.57 33.13 4.990 4.558 4.841 4.628 0.000 0.000 0.000 -4.18 -16.14 126 82 1010.82 1010.82 8.13 34.68 5.020 4.574 4.869 4.644 0.000 0.000 0.000 -2.93 -16.93 128 84 1014.24 1014.24 3.42 35.25 5.080 4.589 4.917 4.658 0.000 0.000 0.000 -1.78 -17.22 130 86 1017.43 1017.43 3.19 35.82 5.138 4.603 4.963 4.672 0.000 0.000 0.000 -1.68 -17.52 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 132 88 1020.83 1022.59 3.41 36.78 5.208 4.634 5.024 4.703 0.160 0.118 0.146 -1.77 -18.04 134 90 1024.04 1025.86 3.21 37.67 5.264 4.659 5.073 4.727 0.188 0.139 0.172 -1.64 -18.46 136 92 1026.98 1028.87 2.93 37.89 5.317 4.680 5.120 4.748 0.197 0.147 0.181 -1.52 -18.84 138 94 1029.70 1031.76 2.72 38.10 5.383 4.712 5.179 4.780 -0.219 -0.175 -0.205 -1.60 -18.63 140 96 1032.60 1034.76 2.91 38.80 5.433 4.737 5.224 4.804 -0.228 -0.186 -0.215 -1.48 -18.95 142 98 1035.26 1037.42 2.66 39.50 5.481 4.759 5.268 4.826 -0.232 -0.191 -0.219 -1.36 -19.28 144 100 1037.65 1039.76 2.39 40.21 5.526 4.780 5.309 4.847 -0.231 -0.193 -0.220 -1.19 -19.64 146 102 1039.66 1041.78 2.01 40.92 5.568 4.797 5.347 4.864 -0.221 -0.188 -0.211 -1.01 -20.01 148 104 1041.37 1043.56 1.71 41.63 5.608 4.814 5.384 4.880 -0.208 -0.181 -0.200 -0.87 -20.39 150 106 1043.18 1043.18 1.81 41.89 5.641 4.773 5.401 4.839 -0.043 -0.035 -0.041 -1.19 -20.71 152 108 1045.41 1045.41 2.24 42.58 5.681 4.791 5.438 4.857 0.000 0.000 0.000 -1.17 -21.02 154 110 1047.58 1047.58 2.17 43.34 5.721 4.811 5.476 4.877 0.000 0.000 0.000 -1.06 -21.37 156 112 1049.43 1049.43 1.85 44.07 5.759 4.832 5.513 4.897 0.000 0.000 0.000 -0.59 -21.71 158 114 1049.62 1049.62 0.19 44.93 5.788 4.854 5.544 4.919 0.000 0.000 0.000 0.00 -22.17 σ 2.74 1.13 0.013 Z = 46 (Pd) (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 88 42 697.55 697.55 -0.36 4.178 4.327 4.256 4.400 0.000 0.000 0.000 -15.94 0.57 90 44 729.06 730.90 31.51 2.25 4.224 4.332 4.279 4.405 0.122 0.129 0.126 -15.71 -0.49 92 46 759.74 761.30 761.35 30.68 4.81 4.261 4.331 4.296 4.405 0.145 0.148 0.147 -14.77 -1.63 94 48 788.20 789.72 788.82 28.46 6.90 4.288 4.324 4.305 4.397 0.105 0.110 0.107 -13.87 -2.87 96 50 816.00 816.00 815.04 27.80 8.68 4.312 4.316 4.313 4.389 0.000 0.000 0.000 -11.93 -3.92 98 52 834.70 836.57 836.32 18.70 10.36 4.377 4.345 4.362 4.418 0.101 0.100 0.100 -9.74 -4.69 100 54 854.02 855.91 856.36 19.32 12.30 4.443 4.380 4.414 4.453 0.173 0.162 0.168 -9.56 -5.44 102 56 872.53 874.44 875.19 18.51 13.98 4.500 4.406 4.458 4.478 4.483 0.202 0.183 0.193 -9.07 -6.28 104 58 889.74 891.80 892.82 17.21 15.61 4.549 4.426 4.495 4.498 4.508 0.202 0.183 0.193 -8.48 -7.13 106 60 905.95 908.13 909.48 16.21 17.20 4.596 4.444 4.531 4.516 4.532 0.194 0.176 0.186 -8.07 -8.00 108 62 921.37 923.59 925.24 15.42 17.87 4.640 4.461 4.565 4.532 4.556 0.180 0.165 0.174 -7.70 -8.82 110 64 936.19 938.97 940.19 14.83 18.57 4.700 4.503 4.619 4.573 4.578 -0.230 -0.215 -0.224 -7.70 -8.72 112 66 951.02 953.68 954.32 14.83 20.09 4.744 4.523 4.654 4.593 -0.234 -0.218 -0.227 -7.23 -9.44 114 68 964.73 967.29 967.63 13.71 21.59 4.785 4.542 4.689 4.612 -0.235 -0.220 -0.229 -6.60 -10.17 116 70 977.68 977.68 980.12 12.95 23.44 4.801 4.512 4.689 4.583 0.000 0.000 0.000 -6.64 -11.37 118 72 990.32 990.32 991.82 12.64 24.96 4.840 4.528 4.721 4.598 0.000 0.000 0.000 -6.20 -12.09 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 120 74 1002.08 1002.08 1002.85 11.77 26.54 4.876 4.543 4.751 4.613 0.000 0.000 0.000 -5.83 -12.87 122 76 1013.43 1015.21 1013.33 11.35 28.32 4.914 4.562 4.785 4.632 0.078 0.090 0.082 -5.58 -13.66 124 78 1024.10 1025.73 10.67 29.98 4.948 4.578 4.814 4.647 0.080 0.092 0.084 -5.15 -14.45 126 80 1033.95 1033.95 9.85 31.27 4.975 4.588 4.837 4.658 0.000 0.000 0.000 -4.97 -15.23 128 82 1043.70 1043.70 9.74 32.88 5.005 4.603 4.864 4.672 0.000 0.000 0.000 -3.52 -16.03 130 84 1047.72 1047.72 4.02 33.48 5.062 4.619 4.910 4.688 0.000 0.000 0.000 -2.09 -16.34 132 86 1051.62 1053.28 3.90 34.19 5.126 4.640 4.962 4.709 0.108 0.085 0.100 -2.19 -16.61 134 88 1055.86 1057.55 4.24 35.02 5.188 4.669 5.016 4.737 0.169 0.131 0.156 -2.19 -16.94 136 90 1059.89 1061.64 4.03 35.85 5.242 4.694 5.063 4.761 0.193 0.149 0.178 -2.05 -17.33 138 92 1063.62 1065.45 3.73 36.65 5.293 4.715 5.108 4.783 0.203 0.157 0.188 -1.91 -17.73 140 94 1067.08 1068.93 3.46 37.38 5.342 4.735 5.151 4.802 0.205 0.159 0.190 -1.77 -18.14 142 96 1070.27 1072.15 3.19 37.67 5.389 4.753 5.192 4.820 0.199 0.157 0.185 -1.65 -18.53 144 98 1073.21 1075.12 2.94 37.94 5.434 4.769 5.231 4.835 0.185 0.149 0.173 -1.54 -18.90 146 100 1075.96 1077.89 2.76 38.31 5.478 4.782 5.269 4.849 0.165 0.137 0.156 -1.48 -19.24 148 102 1078.68 1080.63 2.71 39.02 5.527 4.798 5.311 4.864 -0.164 -0.118 -0.150 -1.49 -19.30 150 104 1081.35 1083.23 2.68 39.98 5.567 4.809 5.346 4.875 -0.136 -0.098 -0.124 -1.43 -19.68 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 152 106 1083.93 1085.75 2.58 40.76 5.606 4.820 5.381 4.886 -0.095 -0.071 -0.088 -1.42 -20.03 154 108 1086.61 1086.61 2.68 41.19 5.646 4.830 5.415 4.896 0.000 0.000 0.000 -1.52 -20.32 156 110 1089.46 1089.46 2.85 41.88 5.687 4.849 5.453 4.914 0.000 0.000 0.000 -1.41 -20.65 158 112 1091.97 1091.97 2.51 42.55 5.727 4.867 5.490 4.932 0.000 0.000 0.000 -1.00 -20.98 160 114 1093.15 1093.15 1.18 43.53 5.755 4.889 5.520 4.954 0.000 0.000 0.000 -0.46 -21.46 162 116 1093.60 1093.60 0.44 44.42 5.783 4.911 5.549 4.976 0.000 0.000 0.000 -0.23 -21.93 164 118 1093.69 1093.69 0.09 45.28 5.812 4.933 5.580 4.998 0.000 0.000 0.000 -0.07 -22.39 166 120 1093.62 1095.39 -0.07 46.02 5.854 4.958 5.620 5.023 0.078 0.092 0.082 0.01 -22.78 σ 2.50 1.18 0.014 Z = 48 (Cd) 92 44 728.67 730.53 -0.39 4.225 4.367 4.300 4.440 0.060 0.061 0.060 -16.53 0.53 94 46 761.39 762.94 32.71 1.65 4.262 4.366 4.316 4.439 0.109 0.108 0.109 -16.01 -0.24 96 48 792.84 794.07 31.45 4.63 4.293 4.363 4.328 4.436 0.113 0.116 0.114 -14.91 -1.36 98 50 822.84 822.84 821.07 30.01 6.85 4.315 4.352 4.333 4.425 0.000 0.000 0.000 -13.01 -2.97 100 52 843.03 843.03 843.77 20.18 8.33 4.372 4.375 4.373 4.447 4.452 0.000 0.000 0.000 -10.12 -3.80 102 54 863.39 865.17 865.38 20.36 9.37 4.438 4.410 4.425 4.482 4.483 0.144 0.129 0.137 -10.28 -4.02 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 104 56 883.45 885.14 885.83 20.06 10.92 4.495 4.436 4.468 4.508 4.510 0.179 0.156 0.168 -9.91 -4.56 106 58 902.54 904.38 905.14 19.10 12.80 4.544 4.458 4.505 4.529 4.533 0.183 0.160 0.172 -9.42 -5.33 108 60 920.66 922.69 923.40 18.12 14.72 4.591 4.477 4.541 4.548 4.553 0.178 0.156 0.168 -8.96 -6.10 110 62 937.80 939.88 940.64 17.13 16.43 4.636 4.494 4.575 4.565 4.572 0.170 0.151 0.161 -8.49 -7.10 112 64 954.04 956.00 957.01 16.25 17.85 4.677 4.509 4.606 4.579 4.591 0.155 0.141 0.149 -8.11 -7.81 114 66 969.60 971.27 972.59 15.56 18.58 4.715 4.523 4.635 4.593 4.609 0.134 0.127 0.131 -7.80 -8.73 116 68 984.71 984.71 987.43 15.11 19.98 4.748 4.530 4.659 4.600 4.623 0.000 0.000 0.000 -7.71 -9.85 118 70 999.48 999.48 1001.56 14.77 21.80 4.790 4.545 4.692 4.615 4.635 0.000 0.000 0.000 -7.33 -10.51 120 72 1013.54 1013.54 1014.96 14.05 23.22 4.828 4.559 4.723 4.629 4.646 0.000 0.000 0.000 -6.96 -11.23 122 74 1026.87 1026.87 1027.76 13.33 24.78 4.864 4.574 4.752 4.643 4.655 0.000 0.000 0.000 -6.61 -11.99 124 76 1039.57 1039.57 1039.99 12.71 26.14 4.898 4.588 4.780 4.657 4.664 0.000 0.000 0.000 -6.31 -12.77 126 78 1051.79 1051.79 1051.69 12.22 27.69 4.930 4.602 4.808 4.671 4.672 0.000 0.000 0.000 -6.03 -13.57 128 80 1063.52 1063.52 1062.81 11.74 29.57 4.961 4.616 4.835 4.685 4.680 0.000 0.000 0.000 -5.76 -14.36 130 82 1074.87 1074.87 1072.84 11.34 31.17 4.991 4.630 4.860 4.698 4.685 0.000 0.000 0.000 -4.17 -15.16 132 84 1079.54 1079.54 1078.33 4.67 31.82 5.046 4.646 4.904 4.715 0.000 0.000 0.000 -2.42 -15.49 134 86 1083.98 1083.98 4.44 32.36 5.100 4.663 4.948 4.731 0.000 0.000 0.000 -2.32 -15.83 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 136 88 1088.54 1090.25 4.56 32.69 5.163 4.691 5.002 4.759 0.137 0.099 0.123 -2.47 -15.83 138 90 1093.23 1094.95 4.69 33.34 5.218 4.717 5.050 4.785 0.172 0.125 0.156 -2.41 -16.03 140 92 1097.75 1099.51 4.52 34.13 5.269 4.741 5.094 4.808 0.188 0.138 0.171 -2.31 -16.33 142 94 1102.05 1103.82 4.30 34.97 5.318 4.763 5.137 4.829 0.195 0.145 0.178 -2.19 -16.69 144 96 1106.09 1107.87 4.03 35.81 5.364 4.783 5.178 4.849 0.193 0.146 0.177 -2.06 -17.08 146 98 1109.85 1111.66 3.76 36.64 5.408 4.801 5.216 4.868 0.184 0.142 0.170 -1.94 -17.49 148 100 1113.38 1115.21 3.53 37.42 5.451 4.818 5.254 4.884 0.169 0.135 0.158 -1.84 -17.90 150 102 1116.73 1118.54 3.35 38.05 5.492 4.833 5.290 4.899 0.150 0.124 0.142 -1.76 -18.32 152 104 1119.92 1121.71 3.19 38.57 5.533 4.845 5.326 4.911 0.122 0.107 0.117 -1.71 -18.75 154 106 1123.12 1124.96 3.20 39.19 5.575 4.855 5.361 4.920 -0.094 -0.066 -0.085 -1.78 -19.22 156 108 1126.48 1126.48 3.36 39.87 5.614 4.866 5.395 4.931 0.000 0.000 0.000 -1.86 -19.62 158 110 1130.00 1130.00 3.52 40.53 5.655 4.883 5.432 4.948 0.000 0.000 0.000 -1.74 -19.94 160 112 1133.16 1133.16 3.16 41.18 5.695 4.900 5.469 4.965 0.000 0.000 0.000 -1.40 -20.27 162 114 1135.27 1135.27 2.11 42.12 5.724 4.921 5.498 4.985 0.000 0.000 0.000 -0.93 -20.73 164 116 1136.69 1136.69 1.42 43.10 5.752 4.943 5.527 5.007 0.000 0.000 0.000 -0.70 -21.22 166 118 1137.70 1137.70 1.01 44.01 5.779 4.965 5.556 5.029 0.000 0.000 0.000 -0.52 -21.70 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 168 120 1138.47 1138.47 0.77 44.85 5.807 4.986 5.585 5.050 0.000 0.000 0.000 -0.38 -22.17 170 122 1138.95 1138.95 0.48 45.42 5.835 5.008 5.614 5.071 0.000 0.000 0.000 -0.23 -22.64 172 124 1139.16 1139.16 0.22 46.03 5.864 5.029 5.643 5.093 0.000 0.000 0.000 -0.06 -23.10 174 126 1138.90 1138.90 -0.26 47.37 5.879 5.057 5.664 5.120 0.000 0.000 0.000 -0.07 -23.72 σ 2.03 1.28 0.012 Z = 50 (Sn) 96 46 761.37 761.37 -0.02 4.262 4.399 4.334 4.471 0.000 0.000 0.000 -17.04 1.94 98 48 795.01 795.01 33.64 2.17 4.291 4.393 4.343 4.465 0.000 0.000 0.000 -16.61 -2.24 100 50 827.97 827.97 825.16 32.96 5.13 4.318 4.387 4.352 4.459 0.000 0.000 0.000 -14.04 -0.05 102 52 849.83 849.83 849.09 21.86 6.80 4.374 4.410 4.392 4.482 0.000 0.000 0.000 -10.95 -1.02 104 54 871.06 871.06 871.93 21.24 7.67 4.427 4.432 4.429 4.503 0.000 0.000 0.000 -10.67 -2.00 106 56 891.76 891.76 893.80 20.70 8.32 4.477 4.453 4.466 4.524 0.000 0.000 0.000 -10.40 -2.94 108 58 911.92 911.92 914.65 20.16 9.38 4.525 4.474 4.501 4.545 4.558 0.000 0.000 0.000 -10.14 -3.44 110 60 931.56 931.56 934.57 19.65 10.90 4.570 4.493 4.536 4.564 4.577 0.000 0.000 0.000 -9.86 -4.41 112 62 950.74 950.74 953.53 19.17 12.94 4.614 4.512 4.569 4.582 4.594 0.000 0.000 0.000 -9.56 -5.09 114 64 969.20 969.20 971.57 18.47 15.16 4.656 4.529 4.601 4.599 4.610 0.000 0.000 0.000 -9.18 -5.28 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 116 66 986.84 986.84 988.68 17.64 17.24 4.698 4.545 4.633 4.615 4.625 0.000 0.000 0.000 -8.76 -6.58 118 68 1003.67 1003.67 1004.95 16.82 18.96 4.739 4.560 4.664 4.630 4.640 0.000 0.000 0.000 -8.37 -7.26 120 70 1019.77 1019.77 1020.54 16.11 20.29 4.779 4.574 4.695 4.644 4.653 0.000 0.000 0.000 -8.02 -7.95 122 72 1035.22 1035.22 1035.52 15.45 21.69 4.817 4.588 4.724 4.657 4.665 0.000 0.000 0.000 -7.69 -8.68 124 74 1050.06 1050.06 1049.96 14.84 23.20 4.852 4.601 4.753 4.670 4.675 0.000 0.000 0.000 -7.38 -9.45 126 76 1064.37 1064.37 1063.88 14.30 24.80 4.886 4.615 4.780 4.683 4.685 0.000 0.000 0.000 -7.09 -10.23 128 78 1078.15 1078.15 1077.37 13.79 26.37 4.917 4.628 4.806 4.696 4.693 0.000 0.000 0.000 -6.82 -11.01 130 80 1091.50 1091.50 1090.29 13.35 27.98 4.948 4.641 4.832 4.709 4.701 0.000 0.000 0.000 -6.57 -11.81 132 82 1104.47 1104.47 1102.84 12.96 29.60 4.977 4.653 4.857 4.722 4.708 0.000 0.000 0.000 -4.71 -12.61 134 84 1109.80 1109.80 1108.87 5.34 30.27 5.030 4.671 4.899 4.739 4.732 0.000 0.000 0.000 -2.76 -13.02 136 86 1114.92 1114.92 5.12 30.94 5.082 4.689 4.942 4.757 0.000 0.000 0.000 -2.67 -13.43 138 88 1119.87 1119.87 4.95 31.32 5.133 4.708 4.983 4.775 0.000 0.000 0.000 -2.59 -14.15 140 90 1124.66 1124.66 4.79 31.42 5.183 4.727 5.025 4.794 0.000 0.000 0.000 -2.53 -14.26 142 92 1129.33 1129.33 4.68 31.58 5.231 4.746 5.066 4.813 0.000 0.000 0.000 -2.48 -14.26 144 94 1134.15 1136.16 4.82 32.10 5.285 4.773 5.113 4.840 0.115 0.064 0.098 -2.49 -15.21 146 96 1138.79 1140.87 4.64 32.71 5.335 4.795 5.156 4.861 -0.130 -0.079 -0.112 -2.49 -15.83 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 148 98 1143.47 1145.52 4.67 33.62 5.381 4.815 5.197 4.881 -0.139 -0.085 -0.121 -2.42 -16.21 150 100 1147.97 1150.00 4.51 34.59 5.423 4.834 5.234 4.900 -0.135 -0.083 -0.118 -2.34 -16.60 152 102 1152.33 1154.33 4.36 35.61 5.464 4.851 5.270 4.917 -0.122 -0.074 -0.106 -2.27 -16.95 154 104 1156.57 1158.51 4.24 36.65 5.503 4.867 5.305 4.933 -0.097 -0.058 -0.084 -2.23 -17.45 156 106 1160.74 1160.74 4.17 37.62 5.541 4.881 5.338 4.946 0.000 0.000 0.000 -2.26 -17.58 158 108 1165.03 1165.03 4.29 38.55 5.583 4.897 5.375 4.962 0.000 0.000 0.000 -2.19 -17.96 160 110 1169.17 1169.17 4.14 39.17 5.624 4.913 5.412 4.978 0.000 0.000 0.000 -2.06 -18.24 162 112 1172.98 1172.98 3.81 39.83 5.664 4.929 5.447 4.993 0.000 0.000 0.000 -1.79 -18.70 164 114 1176.01 1176.01 3.03 40.74 5.695 4.948 5.478 5.013 0.000 0.000 0.000 -1.42 -19.09 166 116 1178.40 1178.40 2.39 41.71 5.722 4.969 5.506 5.033 0.000 0.000 0.000 -1.18 -19.62 168 118 1180.40 1180.40 1.99 42.70 5.749 4.991 5.534 5.054 0.000 0.000 0.000 -1.00 -19.62 170 120 1182.11 1182.11 1.71 43.64 5.776 5.012 5.563 5.076 0.000 0.000 0.000 -0.85 -20.68 172 122 1183.56 1183.56 1.45 44.61 5.803 5.033 5.590 5.097 0.000 0.000 0.000 -0.70 -21.21 174 124 1184.76 1184.76 1.20 45.59 5.829 5.055 5.618 5.118 0.000 0.000 0.000 -0.53 -21.74 176 126 1185.65 1185.65 0.89 46.74 5.851 5.078 5.642 5.141 0.000 0.000 0.000 -0.23 -22.34 178 128 1184.79 1184.79 -0.86 46.66 5.927 5.082 5.703 5.144 0.000 0.000 0.000 0.37 -22.34 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) σ 1.74 1.74 0.010 Z = 52 (Te) 104 52 847.24 848.91 848.36 -2.59 4.411 4.487 4.449 4.558 0.136 0.146 0.141 -13.10 1.22 106 54 871.31 873.11 873.10 24.07 0.24 4.467 4.511 4.489 4.581 0.165 0.164 0.165 -11.94 -1.03 108 56 894.41 896.16 896.80 23.10 2.65 4.519 4.532 4.525 4.602 0.189 0.179 0.184 -11.35 -1.12 110 58 916.22 918.00 919.39 21.81 4.30 4.566 4.549 4.558 4.619 0.198 0.183 0.191 -10.78 -2.04 112 60 937.08 938.86 940.87 20.85 5.51 4.611 4.566 4.590 4.635 0.200 0.183 0.192 -10.37 -2.88 114 62 957.12 958.94 961.34 20.04 6.38 4.653 4.582 4.621 4.651 0.201 0.182 0.193 -9.99 -3.70 116 64 976.81 979.30 980.85 19.69 7.61 4.694 4.600 4.652 4.669 4.685 -0.171 -0.151 -0.162 -9.91 -3.94 118 66 996.03 998.38 999.42 19.22 9.19 4.733 4.615 4.681 4.684 4.696 -0.175 -0.154 -0.166 -9.44 -4.77 120 68 1014.18 1016.48 1017.24 18.15 10.51 4.769 4.627 4.708 4.696 4.704 -0.166 -0.147 -0.158 -8.96 -5.46 122 70 1031.47 1033.70 1034.33 17.29 11.70 4.802 4.637 4.732 4.706 4.710 -0.143 -0.129 -0.137 -8.64 -5.98 124 72 1048.18 1050.26 1050.69 16.71 12.96 4.834 4.647 4.757 4.716 4.718 -0.122 -0.113 -0.118 -8.32 -6.53 126 74 1064.25 1066.22 1066.37 16.07 14.19 4.866 4.657 4.781 4.725 4.727 -0.097 -0.093 -0.095 -8.02 -7.08 128 76 1079.84 1080.89 1081.44 15.59 15.47 4.903 4.671 4.810 4.739 4.735 0.108 0.116 0.112 -7.75 -7.96 130 78 1095.18 1095.18 1095.94 15.34 17.03 4.926 4.676 4.828 4.744 4.742 0.014 0.015 0.014 -7.63 -8.16 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 132 80 1110.17 1110.17 1109.92 14.98 18.66 4.956 4.688 4.852 4.756 4.750 0.000 0.000 0.000 -7.39 -8.94 134 82 1124.79 1124.79 1123.41 14.62 20.32 4.985 4.699 4.876 4.767 4.757 0.000 0.000 0.000 -5.38 -9.75 136 84 1131.10 1131.10 1131.44 6.31 21.29 5.036 4.719 4.917 4.786 4.782 0.000 0.000 0.000 -3.25 -10.26 138 86 1138.06 1139.47 1138.86 6.96 23.14 5.100 4.755 4.973 4.821 0.144 0.124 0.136 -3.78 -11.63 140 88 1145.25 1146.74 1145.67 7.19 25.38 5.152 4.780 5.017 4.846 0.178 0.145 0.165 -3.52 -12.53 142 90 1151.70 1153.28 6.45 27.04 5.200 4.802 5.058 4.868 0.192 0.154 0.178 -3.22 -13.18 144 92 1157.69 1159.41 5.99 28.35 5.247 4.824 5.098 4.890 0.201 0.160 0.186 -3.07 -13.76 146 94 1163.42 1165.29 5.73 29.27 5.294 4.846 5.139 4.912 0.211 0.168 0.196 -2.95 -14.29 148 96 1168.95 1170.98 5.53 30.15 5.342 4.873 5.182 4.939 0.230 0.187 0.215 -2.84 -14.80 150 98 1174.42 1176.63 5.47 30.95 5.400 4.917 5.238 4.982 0.287 0.246 0.272 -2.82 -15.25 152 100 1179.81 1182.04 5.39 31.83 5.450 4.951 5.285 5.015 0.318 0.279 0.305 -2.67 -15.70 154 102 1185.00 1187.05 5.19 32.66 5.466 4.924 5.289 4.988 -0.210 -0.165 -0.195 -2.62 -15.90 156 104 1189.86 1191.91 4.86 33.29 5.503 4.940 5.322 5.005 -0.200 -0.158 -0.186 -2.46 -16.31 158 106 1194.45 1196.46 4.59 33.71 5.538 4.955 5.353 5.020 -0.185 -0.148 -0.173 -2.35 -16.66 160 108 1198.82 1200.74 4.37 33.79 5.573 4.970 5.384 5.034 -0.167 -0.137 -0.158 -2.23 -16.99 162 110 1202.94 1204.81 4.12 33.77 5.606 4.982 5.414 5.046 -0.140 -0.120 -0.134 -2.13 -17.24 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 164 112 1207.20 1207.20 4.26 34.22 5.646 4.977 5.443 5.041 0.000 0.000 0.000 -2.24 -16.79 166 114 1211.27 1211.27 4.07 35.26 5.679 4.994 5.473 5.058 0.000 0.000 0.000 -1.98 -17.27 168 116 1214.83 1214.83 3.56 36.43 5.708 5.014 5.502 5.077 0.000 0.000 0.000 -1.76 -17.83 170 118 1218.00 1218.00 3.18 37.61 5.735 5.034 5.530 5.097 0.000 0.000 0.000 -1.58 -18.40 172 120 1220.91 1220.91 2.91 38.80 5.763 5.055 5.559 5.118 0.028 0.036 0.030 -1.43 -19.03 174 122 1223.51 1223.51 2.60 39.96 5.788 5.075 5.585 5.138 0.000 0.000 0.000 -1.29 -19.55 176 124 1225.92 1225.92 2.41 41.17 5.814 5.096 5.611 5.158 0.000 0.000 0.000 -1.14 -20.14 178 126 1228.09 1228.09 2.17 42.44 5.838 5.117 5.637 5.179 0.000 0.000 0.000 -0.39 -20.75 180 128 1227.34 1227.34 -0.76 42.55 5.903 5.123 5.689 5.186 0.000 0.000 0.000 0.30 -20.82 σ 2.46 1.07 0.008 Z = 54 (Xe) 110 56 894.80 897.04 897.52 0.39 4.546 4.595 4.570 4.664 0.216 0.217 0.217 -12.44 0.16 112 58 918.53 921.04 921.77 23.73 2.30 4.594 4.612 4.602 4.681 0.228 0.223 0.225 -11.69 -0.77 114 60 941.18 943.84 944.97 22.66 4.11 4.639 4.628 4.634 4.697 0.240 0.230 0.235 -11.25 -1.66 116 62 963.04 965.76 967.07 21.86 5.92 4.686 4.646 4.667 4.715 4.721 0.260 0.243 0.252 -10.86 -2.56 118 64 984.20 986.95 988.25 21.16 7.39 4.736 4.670 4.706 4.738 4.739 0.290 0.270 0.281 -10.49 -3.44 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 120 66 1004.65 1007.43 1008.48 20.45 8.62 4.789 4.701 4.749 4.769 4.751 0.321 0.306 0.314 -10.09 -4.23 122 68 1024.30 1026.84 1027.81 19.65 10.13 4.835 4.724 4.786 4.792 4.759 0.333 0.322 0.328 -9.48 -4.94 124 70 1042.46 1044.82 1046.26 18.16 10.99 4.826 4.694 4.769 4.761 4.766 0.219 0.209 0.214 -9.33 -5.37 126 72 1060.61 1062.77 1063.89 18.15 12.43 4.855 4.702 4.790 4.770 4.772 0.190 0.188 0.189 -9.00 -5.89 128 74 1078.06 1080.10 1080.74 17.45 13.80 4.885 4.711 4.812 4.779 4.777 0.165 0.169 0.167 -8.64 -6.43 130 76 1094.87 1096.77 1096.91 16.81 15.03 4.914 4.720 4.834 4.787 4.782 0.136 0.147 0.141 -8.36 -6.94 132 78 1111.18 1112.93 1112.45 16.31 15.99 4.942 4.727 4.856 4.794 4.786 0.104 0.119 0.110 -8.09 -7.50 134 80 1127.06 1128.71 1127.44 15.88 16.89 4.966 4.733 4.874 4.800 4.790 0.051 0.061 0.055 -8.00 -8.08 136 82 1143.20 1143.20 1141.88 16.15 18.42 4.992 4.742 4.895 4.809 4.796 0.000 0.000 0.000 -6.13 -8.82 138 84 1150.60 1152.22 1151.57 7.40 19.51 5.048 4.770 4.941 4.837 4.828 0.089 0.092 0.090 -4.33 -9.43 140 86 1159.53 1161.25 1160.72 8.93 21.47 5.105 4.801 4.990 4.867 4.857 0.154 0.145 0.151 -4.54 -10.12 142 88 1168.32 1169.98 1169.11 8.79 23.07 5.157 4.828 5.034 4.893 4.884 0.192 0.171 0.184 -4.28 -10.90 144 90 1176.20 1178.13 1176.90 7.88 24.51 5.204 4.851 5.074 4.916 4.908 0.208 0.182 0.199 -3.91 -11.62 146 92 1183.60 1185.68 1184.12 7.40 25.92 5.250 4.874 5.114 4.939 4.932 0.222 0.191 0.210 -3.72 -12.31 148 94 1190.65 1192.80 7.05 27.23 5.295 4.896 5.153 4.961 0.236 0.201 0.223 -3.55 -12.95 150 96 1197.39 1199.58 6.73 28.44 5.340 4.919 5.193 4.984 0.253 0.214 0.239 -3.40 -13.56 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 152 98 1203.84 1206.08 6.46 29.42 5.387 4.947 5.235 5.011 0.280 0.237 0.265 -3.26 -14.11 154 100 1210.07 1212.34 6.22 30.26 5.437 4.980 5.281 5.044 0.314 0.272 0.299 -3.11 -14.59 156 102 1215.89 1218.21 5.82 30.89 5.478 5.003 5.319 5.067 0.320 0.283 0.307 -2.88 -15.02 158 104 1221.28 1223.63 5.39 31.42 5.513 5.017 5.348 5.080 0.305 0.272 0.294 -2.72 -15.42 160 106 1226.49 1228.69 5.21 32.05 5.533 5.004 5.360 5.068 -0.214 -0.182 -0.203 -2.70 -15.49 162 108 1231.59 1233.73 5.10 32.78 5.566 5.018 5.389 5.082 -0.198 -0.170 -0.188 -2.59 -15.85 164 110 1236.46 1238.46 4.87 33.52 5.598 5.033 5.419 5.096 -0.182 -0.159 -0.174 -2.45 -16.23 166 112 1241.02 1242.98 4.56 33.81 5.630 5.046 5.446 5.109 -0.159 -0.143 -0.154 -2.32 -16.58 168 114 1245.39 1247.28 4.37 34.12 5.660 5.056 5.473 5.119 -0.126 -0.120 -0.124 -2.27 -16.90 170 116 1249.65 1251.46 4.26 34.82 5.692 5.063 5.500 5.126 -0.076 -0.084 -0.079 -2.25 -17.19 172 118 1254.14 1255.28 4.49 36.13 5.730 5.083 5.535 5.146 0.103 0.132 0.112 -2.22 -17.70 174 120 1258.30 1259.37 4.16 37.39 5.760 5.098 5.563 5.161 0.096 0.128 0.106 -1.96 -18.19 176 122 1262.05 1263.49 3.75 38.53 5.782 5.114 5.586 5.177 0.070 0.093 0.077 -1.71 -18.79 178 124 1265.27 1265.27 3.22 39.35 5.801 5.131 5.606 5.193 0.000 0.000 0.000 -1.73 -19.29 180 126 1268.66 1268.66 3.39 40.57 5.825 5.151 5.631 5.212 0.000 0.000 0.000 -0.55 -19.89 182 128 1268.10 1268.10 -0.56 40.77 5.882 5.159 5.678 5.221 0.000 0.000 0.000 0.20 -20.01 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) σ 2.67 1.03 0.012 Z = 56 (Ba) 114 58 918.94 921.43 922.22 25.41 0.41 4.617 4.670 4.643 4.738 0.251 0.257 0.254 -12.55 0.48 116 60 944.23 946.86 25.29 3.05 4.716 4.743 4.729 4.810 0.404 0.409 0.406 -12.63 -1.20 118 62 967.42 970.46 23.19 4.37 4.754 4.754 4.754 4.821 0.398 0.403 0.400 -11.51 -2.00 120 64 989.97 992.83 993.64 22.56 5.77 4.765 4.734 4.751 4.802 4.809 0.338 0.330 0.334 -11.27 -2.50 122 66 1011.95 1014.69 1015.50 21.98 7.30 4.803 4.748 4.777 4.815 4.815 0.336 0.328 0.332 -10.79 -3.17 124 68 1032.88 1035.41 1036.12 20.93 8.58 4.840 4.761 4.804 4.828 4.819 0.331 0.323 0.328 -10.14 -3.77 126 70 1052.27 1054.82 1055.84 19.38 9.80 4.853 4.750 4.807 4.817 4.822 0.275 0.268 0.272 -9.66 -4.32 128 72 1071.22 1073.57 1074.69 18.95 10.61 4.873 4.752 4.820 4.819 4.826 0.225 0.228 0.226 -9.49 -4.74 130 74 1089.69 1091.91 1092.72 18.47 11.63 4.898 4.758 4.839 4.825 4.828 0.192 0.201 0.196 -9.14 -5.28 132 76 1107.47 1109.58 1110.04 17.78 12.60 4.925 4.764 4.857 4.831 4.830 0.154 0.169 0.160 -8.87 -5.81 134 78 1124.91 1126.88 1126.70 17.44 13.73 4.951 4.770 4.876 4.836 4.832 0.114 0.132 0.122 -8.71 -6.38 136 80 1142.11 1143.74 1142.77 17.20 15.05 4.976 4.775 4.894 4.842 4.833 0.065 0.079 0.071 -8.62 -7.04 138 82 1159.78 1159.78 1158.29 17.67 16.57 5.000 4.783 4.913 4.849 4.838 0.000 0.000 0.000 -6.83 -7.87 140 84 1168.28 1168.28 1169.44 8.51 17.68 5.048 4.806 4.953 4.872 4.868 0.000 0.000 0.000 -4.35 -8.48 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 142 86 1178.33 1180.15 1180.16 10.04 18.79 5.108 4.841 5.005 4.907 4.895 0.156 0.154 0.155 -5.22 -8.89 144 88 1188.60 1190.31 1190.23 10.27 20.28 5.160 4.869 5.049 4.934 4.924 0.201 0.190 0.197 -5.02 -9.57 146 90 1197.91 1199.99 1199.47 9.32 21.71 5.206 4.892 5.088 4.957 4.948 0.218 0.204 0.213 -4.60 -10.26 148 92 1206.70 1208.92 1208.29 8.78 23.09 5.251 4.915 5.126 4.980 4.973 0.234 0.216 0.227 -4.38 -10.92 150 94 1215.03 1217.32 1216.78 8.33 24.38 5.296 4.938 5.165 5.003 0.252 0.229 0.244 -4.17 -11.55 152 96 1223.02 1225.34 7.99 25.64 5.342 4.965 5.206 5.029 0.280 0.250 0.269 -4.02 -12.21 154 98 1230.83 1233.08 7.81 26.99 5.393 4.998 5.253 5.062 0.320 0.284 0.307 -3.90 -13.01 156 100 1238.27 1240.48 7.43 28.20 5.442 5.032 5.298 5.095 0.350 0.317 0.338 -3.59 -13.67 158 102 1244.90 1247.20 6.63 29.00 5.476 5.045 5.327 5.108 0.339 0.309 0.328 -3.26 -14.04 160 104 1251.02 1253.40 6.12 29.74 5.505 5.053 5.351 5.116 0.316 0.287 0.306 -3.10 -14.37 162 106 1256.92 1259.29 5.90 30.42 5.537 5.063 5.378 5.126 0.295 0.269 0.286 -2.99 -14.75 164 108 1262.62 1264.93 5.71 31.03 5.569 5.076 5.406 5.139 0.278 0.256 0.270 -2.86 -15.16 166 110 1268.03 1270.25 5.41 31.57 5.600 5.087 5.432 5.149 0.257 0.239 0.251 -2.69 -15.56 168 112 1273.16 1275.19 5.13 32.14 5.621 5.086 5.449 5.148 -0.179 -0.161 -0.173 -2.68 -15.62 170 114 1278.22 1280.25 5.06 32.83 5.650 5.096 5.474 5.159 -0.148 -0.137 -0.144 -2.62 -15.97 172 116 1283.32 1285.32 5.10 33.67 5.681 5.108 5.501 5.170 0.126 0.138 0.130 -2.72 -16.30 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 174 118 1288.56 1290.42 5.25 34.43 5.712 5.118 5.528 5.180 0.095 0.114 0.101 -2.66 -16.66 176 120 1293.69 1295.37 5.12 35.39 5.742 5.132 5.555 5.194 0.079 0.100 0.086 -2.52 -17.12 178 122 1298.50 1299.97 4.81 36.45 5.768 5.148 5.580 5.210 0.065 0.085 0.071 -2.32 -17.68 180 124 1303.00 1303.00 4.50 37.73 5.789 5.164 5.602 5.225 0.000 0.000 0.000 -2.33 -18.46 182 126 1307.58 1307.58 4.59 38.92 5.813 5.182 5.627 5.243 0.000 0.000 0.000 -0.71 -19.05 192 136 1307.90 1309.42 0.39 40.33 6.072 5.259 5.847 5.320 0.211 0.152 0.194 -0.25 -19.67 194 138 1308.22 1309.74 0.32 40.85 6.118 5.277 5.888 5.337 0.227 0.166 0.209 -0.18 -19.94 196 140 1308.35 1309.92 0.13 41.43 6.162 5.293 5.927 5.353 0.234 0.173 0.216 -0.08 -20.21 198 142 1308.30 1309.94 -0.05 41.82 6.205 5.308 5.965 5.368 0.234 0.175 0.217 -0.01 -20.46 σ 2.53 0.81 0.007 Z = 58 (Ce) 116 58 917.91 920.58 29.05 -1.03 4.767 4.857 4.812 4.922 0.517 0.540 0.529 -14.60 0.62 118 60 945.66 948.33 27.76 1.43 4.733 4.792 4.762 4.858 0.410 0.426 0.418 -13.52 -0.31 120 62 970.69 973.78 25.02 3.27 4.791 4.826 4.808 4.892 0.447 0.469 0.458 -12.26 -1.14 122 64 994.38 997.41 23.70 4.41 4.810 4.819 4.814 4.885 0.412 0.428 0.420 -11.77 -1.79 124 66 1017.43 1020.13 23.04 5.48 4.827 4.809 4.819 4.875 0.374 0.383 0.378 -11.33 -2.33 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 126 68 1039.30 1041.88 1042.43 21.87 6.41 4.855 4.811 4.835 4.877 0.351 0.355 0.353 -10.66 -2.79 128 70 1059.80 1062.50 1063.29 20.50 7.53 4.960 4.902 4.934 4.967 0.469 0.486 0.477 -10.23 -3.80 130 72 1079.67 1082.24 1083.32 19.88 8.45 4.993 4.911 4.957 4.976 0.466 0.479 0.472 -9.27 -4.44 132 74 1099.10 1101.44 1102.51 19.42 9.41 4.911 4.802 4.863 4.868 0.205 0.216 0.210 -9.69 -4.25 134 76 1117.96 1120.22 1121.01 18.87 10.49 4.935 4.805 4.880 4.872 0.164 0.181 0.172 -9.40 -4.79 136 78 1136.47 1138.59 1138.83 18.51 11.57 4.960 4.809 4.896 4.876 4.874 0.122 0.142 0.131 -9.29 -5.33 138 80 1154.99 1154.99 1156.03 18.52 12.88 4.981 4.811 4.911 4.877 4.874 0.000 0.000 0.000 -9.72 -6.06 140 82 1174.34 1174.34 1172.68 19.35 14.57 5.008 4.820 4.931 4.886 4.877 0.000 0.000 0.000 -7.50 -6.74 142 84 1184.13 1184.13 1185.28 9.79 15.85 5.055 4.846 4.971 4.911 4.906 0.000 0.000 0.000 -4.97 -7.38 144 86 1194.92 1196.76 1197.33 10.79 16.59 5.112 4.878 5.019 4.944 4.930 0.154 0.156 0.155 -5.85 -7.86 146 88 1206.54 1208.28 1208.66 11.62 17.94 5.163 4.908 5.063 4.973 4.959 0.204 0.202 0.203 -5.69 -8.51 148 90 1217.14 1219.31 1219.58 10.60 19.23 5.208 4.932 5.101 4.996 4.989 0.222 0.217 0.220 -5.24 -9.14 150 92 1228.11 1230.28 1230.17 10.97 21.41 5.285 5.004 5.178 5.067 0.343 0.341 0.342 -5.36 -10.64 152 94 1237.82 1240.17 9.70 22.78 5.323 5.017 5.208 5.080 0.343 0.336 0.340 -4.85 -11.21 154 96 1247.15 1249.51 9.34 24.13 5.361 5.034 5.240 5.097 0.347 0.335 0.343 -4.68 -11.77 156 98 1256.20 1258.53 9.05 25.37 5.402 5.056 5.276 5.119 0.357 0.342 0.352 -4.50 -12.31 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 158 100 1264.92 1266.82 8.71 26.65 5.448 5.085 5.318 5.148 0.380 0.365 0.375 -4.06 -12.91 160 102 1272.16 1274.52 7.24 27.26 5.480 5.095 5.344 5.158 0.367 0.352 0.361 -3.56 -13.22 162 104 1279.09 1281.57 6.93 28.07 5.572 5.169 5.431 5.230 0.463 0.448 0.457 -3.40 -13.81 164 106 1285.42 1287.89 6.33 28.50 5.603 5.179 5.457 5.240 0.452 0.438 0.447 -3.11 -14.17 166 108 1291.94 1294.29 6.52 29.31 5.564 5.115 5.411 5.177 0.289 0.271 0.283 -3.28 -14.19 168 110 1298.21 1300.44 6.28 30.18 5.596 5.126 5.438 5.188 0.273 0.257 0.267 -3.06 -14.59 170 112 1303.94 1306.17 5.73 30.78 5.622 5.133 5.460 5.195 0.244 0.235 0.241 -2.86 -14.90 172 114 1309.39 1311.57 5.45 31.17 5.645 5.139 5.480 5.201 0.204 0.205 0.205 -2.85 -15.12 174 116 1314.92 1316.99 5.53 31.60 5.671 5.145 5.501 5.207 0.158 0.169 0.162 -2.94 -15.31 176 118 1320.68 1322.64 5.76 32.11 5.698 5.149 5.523 5.211 0.094 0.106 0.098 -3.09 -15.60 178 120 1326.88 1326.88 6.21 33.20 5.725 5.162 5.547 5.223 0.000 0.000 0.000 -3.14 -16.17 180 122 1333.04 1333.04 6.16 34.54 5.752 5.179 5.574 5.241 0.000 0.000 0.000 -3.05 -16.64 182 124 1339.02 1339.02 5.98 36.02 5.778 5.196 5.599 5.257 0.000 0.000 0.000 -2.93 -17.13 184 126 1344.83 1344.83 5.81 37.25 5.803 5.212 5.624 5.273 0.000 0.000 0.000 -1.46 -17.63 186 128 1344.84 1344.84 0.01 37.56 5.851 5.225 5.663 5.286 0.000 0.000 0.000 -0.09 -17.85 192 134 1345.35 1346.76 0.59 37.84 6.001 5.273 5.791 5.334 0.178 0.125 0.162 -0.49 -18.49 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 194 136 1346.21 1347.74 0.87 38.32 6.047 5.293 5.832 5.353 0.207 0.156 0.192 -0.51 -18.72 196 138 1347.09 1348.63 0.88 38.88 6.093 5.312 5.872 5.372 0.228 0.176 0.212 -0.46 -18.97 198 140 1347.78 1349.39 0.69 39.43 6.135 5.329 5.910 5.389 0.237 0.186 0.222 -0.35 -19.23 200 142 1348.25 1349.94 0.47 39.95 6.176 5.346 5.947 5.405 0.239 0.190 0.225 -0.26 -19.49 202 144 1348.68 1350.62 0.44 40.57 6.234 5.368 5.998 5.427 -0.247 -0.204 -0.235 -0.37 -19.98 204 146 1349.26 1351.17 0.58 41.19 6.272 5.386 6.033 5.445 -0.254 -0.210 -0.241 -0.32 -20.27 206 148 1349.72 1351.53 0.46 41.74 6.309 5.403 6.067 5.462 -0.258 -0.214 -0.246 -0.24 -20.53 208 150 1349.97 1351.70 0.26 42.26 6.346 5.419 6.101 5.477 -0.260 -0.216 -0.248 -0.10 -20.78 210 152 1349.93 1351.69 -0.05 43.59 6.381 5.432 6.134 5.490 -0.255 -0.212 -0.243 0.02 -20.98 σ 2.59 0.86 0.009 Z = 60 (Nd) 120 60 945.40 947.83 -0.26 4.745 4.833 4.789 4.899 0.411 0.433 0.422 -14.36 1.29 122 62 971.81 974.47 26.41 1.12 4.784 4.842 4.812 4.907 0.418 0.431 0.425 -12.93 -0.80 124 64 996.96 999.47 25.15 2.58 4.813 4.848 4.830 4.913 0.404 0.418 0.411 -12.41 -0.38 126 66 1021.13 1023.53 24.17 3.70 4.841 4.854 4.847 4.919 0.389 0.405 0.396 -11.84 -1.05 128 68 1043.88 1046.45 22.75 4.58 4.874 4.863 4.869 4.928 0.375 0.391 0.383 -11.18 -1.72 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 130 70 1065.65 1068.44 1068.93 21.77 5.85 4.942 4.906 4.926 4.971 0.429 0.437 0.433 -10.80 -2.36 132 72 1086.84 1089.59 1089.90 21.19 7.17 4.991 4.935 4.965 4.999 4.917 0.451 0.459 0.455 -9.90 -3.03 134 74 1106.46 1108.93 1110.26 19.62 7.36 4.923 4.845 4.888 4.911 4.913 0.218 0.233 0.224 -10.21 -3.28 136 76 1126.35 1128.81 1129.96 19.89 8.38 4.945 4.846 4.902 4.911 4.911 0.174 0.193 0.182 -9.92 -3.77 138 78 1145.92 1148.17 1148.92 19.57 9.45 4.968 4.847 4.916 4.913 4.912 0.126 0.148 0.136 -9.87 -4.32 140 80 1165.77 1165.77 1167.30 19.85 10.78 4.988 4.846 4.928 4.912 4.910 0.000 0.000 0.000 -10.37 -4.96 142 82 1186.40 1186.40 1185.14 20.63 12.05 5.014 4.854 4.947 4.920 4.912 0.000 0.000 0.000 -7.04 -5.56 144 84 1197.43 1197.43 1199.08 11.03 13.29 5.060 4.879 4.985 4.944 4.942 0.000 0.000 0.000 -5.59 -6.18 146 86 1209.47 1211.33 1212.40 12.04 14.55 5.116 4.915 5.034 4.979 4.970 0.152 0.157 0.154 -6.46 -6.88 148 88 1222.45 1224.24 1225.02 12.98 15.90 5.167 4.949 5.080 5.013 5.000 0.210 0.218 0.213 -6.36 -7.54 150 90 1235.21 1237.53 1237.44 12.76 18.07 5.264 5.034 5.173 5.098 5.040 0.365 0.380 0.371 -6.79 -8.67 152 92 1248.39 1250.52 1250.05 13.18 20.28 5.289 5.046 5.194 5.109 0.353 0.370 0.360 -6.01 -9.17 154 94 1259.34 1261.67 1261.62 10.95 21.53 5.329 5.063 5.227 5.126 0.362 0.374 0.367 -5.44 -9.81 156 96 1269.85 1272.17 1272.39 10.51 22.69 5.368 5.083 5.260 5.145 0.371 0.377 0.373 -5.23 -10.44 158 98 1280.01 1282.18 1282.16 10.16 23.80 5.406 5.102 5.293 5.164 0.379 0.380 0.379 -5.03 -11.08 160 100 1289.76 1291.66 1291.19 9.75 24.84 5.445 5.120 5.325 5.182 0.385 0.381 0.383 -4.52 -11.70 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 162 102 1297.79 1300.12 8.03 25.63 5.493 5.145 5.367 5.207 0.404 0.393 0.400 -3.98 -12.15 164 104 1305.48 1307.91 7.69 26.40 5.551 5.178 5.417 5.240 0.441 0.418 0.433 -3.77 -12.55 166 106 1312.56 1314.98 7.07 27.14 5.583 5.192 5.445 5.253 0.433 0.413 0.426 -3.49 -12.97 168 108 1319.40 1321.76 6.85 27.47 5.562 5.156 5.420 5.218 0.305 0.297 0.302 -3.62 -13.32 170 110 1326.38 1328.63 6.98 28.17 5.593 5.166 5.446 5.227 0.288 0.280 0.285 -3.41 -13.64 172 112 1332.72 1335.08 6.34 28.78 5.619 5.174 5.468 5.235 0.264 0.260 0.262 -3.10 -13.94 174 114 1338.61 1340.95 5.89 29.22 5.641 5.177 5.486 5.239 0.226 0.231 0.228 -3.04 -14.17 176 116 1344.54 1346.72 5.93 29.62 5.663 5.180 5.503 5.242 0.178 0.190 0.182 -3.17 -14.39 178 118 1351.13 1353.10 6.60 30.46 5.686 5.181 5.521 5.242 -0.110 -0.107 -0.109 -3.30 -14.78 180 120 1357.63 1357.63 6.50 30.74 5.713 5.186 5.543 5.247 0.041 0.046 0.043 -3.51 -14.92 182 122 1364.53 1364.53 6.90 31.49 5.739 5.200 5.567 5.261 0.000 0.000 0.000 -3.44 -15.28 184 124 1371.29 1371.29 6.76 32.27 5.765 5.216 5.592 5.277 0.000 0.000 0.000 -3.33 -15.69 186 126 1377.91 1377.91 6.62 33.07 5.790 5.232 5.616 5.293 0.000 0.000 0.000 -1.10 -16.10 188 128 1378.45 1378.45 0.54 33.61 5.835 5.246 5.654 5.306 0.000 0.000 0.000 -0.36 -16.38 190 130 1378.95 1378.95 0.50 34.14 5.880 5.259 5.691 5.320 0.000 0.000 0.000 -0.34 -16.65 192 132 1379.99 1381.30 1.04 35.23 5.937 5.284 5.740 5.344 0.141 0.100 0.128 -0.74 -17.21 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 194 134 1381.34 1382.77 1.36 36.00 5.981 5.305 5.781 5.365 0.174 0.129 0.160 -0.74 -17.56 196 136 1382.68 1384.22 1.33 36.47 6.026 5.325 5.820 5.385 0.200 0.153 0.186 -0.74 -17.83 198 138 1384.01 1385.57 1.33 36.91 6.070 5.345 5.860 5.405 0.222 0.175 0.208 -0.70 -18.07 200 140 1385.29 1387.10 1.29 37.51 6.144 5.388 5.928 5.447 -0.255 -0.238 -0.250 -0.94 -18.57 202 142 1386.78 1388.71 1.49 38.53 6.180 5.406 5.961 5.465 -0.260 -0.242 -0.255 -0.72 -18.87 204 144 1387.98 1389.99 1.19 39.29 6.216 5.422 5.993 5.481 -0.263 -0.242 -0.257 -0.63 -19.14 206 146 1389.04 1391.05 1.07 39.78 6.251 5.437 6.025 5.496 -0.266 -0.242 -0.259 -0.57 -19.41 208 148 1389.99 1391.91 0.95 40.27 6.287 5.452 6.058 5.510 -0.269 -0.242 -0.261 -0.49 -19.67 210 150 1390.75 1392.55 0.75 40.77 6.322 5.468 6.090 5.526 -0.271 -0.243 -0.263 -0.35 -19.93 212 152 1391.16 1392.96 0.42 41.24 6.357 5.484 6.122 5.542 -0.271 -0.243 -0.263 -0.18 -20.20 214 154 1391.26 1393.13 0.10 41.59 6.390 5.495 6.152 5.553 -0.264 -0.237 -0.257 -0.07 -20.43 216 156 1391.20 1393.09 -0.06 41.91 6.421 5.503 6.179 5.561 -0.252 -0.225 -0.244 -0.02 -20.62 σ 2.56 0.90 0.032 Z = 62 (Sm) 128 66 1021.46 1024.30 0.33 4.854 4.895 4.874 4.960 0.385 0.404 0.395 -12.68 0.32 130 68 1045.93 1048.74 24.48 2.06 4.884 4.900 4.891 4.965 0.366 0.383 0.374 -12.04 -0.59 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 132 70 1069.33 1072.20 23.40 3.68 4.914 4.905 4.910 4.970 0.354 0.366 0.360 -11.20 -1.51 134 72 1091.75 1094.51 22.43 4.92 4.993 4.962 4.979 5.026 0.438 0.443 0.440 -10.68 -1.99 136 74 1111.99 1114.57 1116.00 20.23 5.53 4.936 4.889 4.915 4.954 0.233 0.255 0.243 -10.66 -2.40 138 76 1132.80 1135.46 1136.83 20.81 6.45 4.956 4.886 4.925 4.951 4.960 0.185 0.208 0.195 -10.40 -2.86 140 78 1153.42 1155.76 1156.93 20.62 7.50 4.976 4.884 4.935 4.949 4.957 0.127 0.149 0.137 -10.47 -3.39 142 80 1174.46 1174.46 1176.60 21.05 8.69 4.994 4.880 4.945 4.945 4.952 0.000 0.000 0.000 -10.98 -3.99 144 82 1196.30 1196.30 1195.73 21.83 9.90 5.020 4.887 4.963 4.952 4.952 0.000 0.000 0.000 -8.75 -4.59 146 84 1208.56 1208.56 1210.90 12.26 11.14 5.064 4.911 5.000 4.975 4.981 0.000 0.000 0.000 -6.20 -5.21 148 86 1222.12 1224.02 1225.39 13.56 12.65 5.120 4.951 5.050 5.015 5.004 0.152 0.162 0.156 -7.11 -5.96 150 88 1236.44 1238.33 1239.24 14.32 13.99 5.172 4.987 5.096 5.051 5.039 0.215 0.232 0.222 -7.05 -6.59 152 90 1250.61 1252.73 1253.10 14.17 15.40 5.237 5.039 5.157 5.102 5.082 0.301 0.322 0.309 -7.22 -7.20 154 92 1264.79 1266.92 1266.93 14.18 16.41 5.286 5.070 5.200 5.133 5.105 0.339 0.353 0.345 -6.64 -7.67 156 94 1277.08 1279.54 1279.98 12.28 17.74 5.324 5.089 5.232 5.152 0.347 0.358 0.351 -6.13 -8.38 158 96 1289.00 1291.52 1292.01 11.92 19.15 5.362 5.109 5.264 5.172 0.356 0.364 0.359 -5.93 -9.09 160 98 1300.55 1302.99 1303.14 11.56 20.55 5.401 5.131 5.298 5.193 0.369 0.372 0.370 -5.70 -9.76 162 100 1311.61 1313.65 1313.43 11.05 21.85 5.441 5.151 5.332 5.213 0.379 0.380 0.380 -5.13 -10.37 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 164 102 1320.78 1323.35 1323.12 9.18 22.99 5.478 5.170 5.364 5.231 0.383 0.382 0.383 -4.44 -11.00 166 104 1329.42 1331.96 8.64 23.94 5.550 5.216 5.427 5.277 0.450 0.430 0.442 -4.25 -11.36 168 106 1337.30 1339.70 7.87 24.74 5.532 5.187 5.407 5.248 0.341 0.341 0.341 -4.08 -12.04 170 108 1345.15 1347.48 7.85 25.74 5.561 5.195 5.430 5.256 0.319 0.321 0.320 -3.93 -12.42 172 110 1352.74 1355.06 7.59 26.36 5.591 5.203 5.454 5.264 0.299 0.302 0.300 -3.75 -12.77 174 112 1359.78 1362.23 7.04 27.06 5.618 5.212 5.477 5.273 0.280 0.283 0.281 -3.37 -13.15 176 114 1366.09 1368.21 6.32 27.49 5.631 5.200 5.483 5.261 -0.196 -0.191 -0.194 -3.62 -13.43 178 116 1372.98 1375.13 6.88 28.44 5.656 5.208 5.504 5.269 -0.172 -0.169 -0.171 -3.48 -13.75 180 118 1379.78 1381.88 6.80 28.65 5.679 5.213 5.523 5.274 -0.132 -0.134 -0.133 -3.54 -13.96 182 120 1386.73 1388.61 6.95 29.10 5.704 5.220 5.544 5.281 -0.096 -0.100 -0.098 -3.57 -14.21 184 122 1394.01 1394.01 7.28 29.49 5.729 5.223 5.563 5.284 0.027 0.033 0.029 -3.82 -14.40 186 124 1401.61 1401.61 7.60 30.32 5.754 5.238 5.587 5.299 0.000 0.000 0.000 -3.75 -14.81 188 126 1409.05 1409.05 7.44 31.15 5.779 5.254 5.611 5.314 0.000 0.000 0.000 -2.69 -15.23 190 128 1410.16 1410.16 1.11 31.71 5.822 5.268 5.647 5.328 0.000 0.000 0.000 -0.63 -15.52 192 130 1411.28 1412.63 1.12 32.33 5.874 5.288 5.691 5.348 0.096 0.077 0.090 -0.96 -15.88 194 132 1413.41 1414.70 2.13 33.42 5.922 5.318 5.736 5.378 0.153 0.126 0.144 -1.17 -16.33 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 196 134 1415.49 1416.97 2.08 34.15 5.965 5.341 5.775 5.401 0.180 0.149 0.170 -1.06 -16.71 198 136 1417.42 1419.01 1.92 34.74 6.008 5.362 5.813 5.421 0.202 0.167 0.191 -1.01 -17.03 200 138 1419.27 1420.90 1.85 35.26 6.051 5.382 5.852 5.441 0.223 0.186 0.211 -0.96 -17.32 202 140 1421.30 1423.17 2.03 36.01 6.134 5.471 5.938 5.529 0.354 0.344 0.351 -1.22 -17.93 204 142 1423.44 1425.35 2.14 36.65 6.169 5.491 5.971 5.549 0.363 0.349 0.359 -1.01 -18.27 206 144 1425.18 1427.15 1.74 37.20 6.204 5.509 6.003 5.566 0.368 0.352 0.364 -0.84 -18.58 208 146 1426.67 1428.72 1.50 37.63 6.228 5.467 6.011 5.525 -0.262 -0.243 -0.257 -0.86 -18.40 210 148 1428.21 1430.18 1.53 38.21 6.263 5.483 6.043 5.541 -0.266 -0.244 -0.260 -0.77 -18.70 212 150 1429.55 1431.41 1.34 38.80 6.298 5.500 6.075 5.557 -0.270 -0.247 -0.263 -0.64 -18.99 214 152 1430.55 1432.36 1.00 39.39 6.332 5.517 6.107 5.575 -0.272 -0.249 -0.266 -0.45 -19.29 216 154 1431.18 1433.06 0.63 39.92 6.363 5.530 6.136 5.587 -0.267 -0.245 -0.261 -0.32 -19.57 218 156 1431.61 1433.52 0.43 40.40 6.394 5.539 6.163 5.597 -0.257 -0.236 -0.251 -0.26 -19.84 220 158 1431.95 1433.80 0.34 40.87 6.424 5.549 6.190 5.606 -0.246 -0.226 -0.240 -0.21 -20.10 222 160 1432.19 1433.92 0.24 41.33 6.454 5.559 6.217 5.616 -0.235 -0.217 -0.230 -0.13 -20.35 224 162 1432.22 1433.94 0.03 41.72 6.482 5.569 6.243 5.626 -0.221 -0.206 -0.217 -0.03 -20.57 232 170 1432.24 1432.24 0.29 41.74 6.603 5.559 6.341 5.617 0.000 0.000 0.000 -0.07 -20.58 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 234 172 1432.09 1432.09 -0.15 42.34 6.622 5.581 6.363 5.638 0.000 0.000 0.000 0.09 -20.89 σ 2.80 1.13 0.014 Z = 64 (Gd) 132 68 1046.09 1048.94 0.16 4.895 4.938 4.916 5.003 0.361 0.378 0.369 -12.94 0.30 134 70 1071.35 1074.24 25.25 2.02 4.926 4.944 4.935 5.009 0.354 0.368 0.361 -11.94 -0.60 136 72 1094.67 1097.35 23.32 2.92 5.000 4.994 4.997 5.058 0.429 0.430 0.430 -11.40 -1.01 138 74 1115.96 1118.72 21.29 3.98 5.009 4.987 4.999 5.050 0.378 0.388 0.383 -10.72 -1.64 140 76 1137.53 1140.33 1141.70 21.57 4.74 4.967 4.927 4.949 4.991 0.197 0.226 0.211 -10.84 -2.02 142 78 1159.59 1162.02 1163.02 22.06 6.17 4.988 4.923 4.959 4.988 -0.142 -0.159 -0.150 -11.01 -2.77 144 80 1181.30 1181.30 1183.96 21.71 6.84 5.000 4.913 4.962 4.978 0.000 0.000 0.000 -11.59 -3.08 146 82 1204.30 1204.30 1204.43 23.00 8.00 5.025 4.920 4.979 4.984 4.980 0.000 0.000 0.000 -9.34 -3.69 148 84 1217.86 1220.03 1220.75 13.56 9.30 5.071 4.946 5.017 5.010 5.008 -0.054 -0.064 -0.058 -7.05 -4.34 150 86 1232.97 1234.91 1236.39 15.11 10.85 5.126 4.986 5.067 5.050 5.034 0.155 0.171 0.162 -7.79 -5.05 152 88 1248.54 1250.46 1251.48 15.57 12.10 5.175 5.020 5.111 5.084 5.077 0.212 0.231 0.220 -7.65 -5.65 154 90 1263.67 1265.81 1266.62 15.13 13.06 5.233 5.063 5.163 5.126 5.122 0.282 0.303 0.291 -7.66 -6.06 156 92 1278.86 1281.05 1281.59 15.19 14.07 5.286 5.100 5.211 5.162 5.142 0.333 0.351 0.341 -7.26 -6.53 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 158 94 1292.66 1295.13 1295.89 13.80 15.59 5.324 5.121 5.243 5.183 5.157 0.344 0.359 0.350 -6.85 -7.22 160 96 1306.07 1308.56 1309.28 13.41 17.08 5.362 5.141 5.274 5.203 5.173 0.354 0.366 0.358 -6.64 -7.89 162 98 1319.04 1321.37 1321.76 12.97 18.49 5.399 5.161 5.306 5.223 0.365 0.373 0.368 -6.34 -8.52 164 100 1331.27 1333.34 1333.32 12.22 19.66 5.437 5.179 5.338 5.240 0.373 0.376 0.374 -5.77 -9.10 166 102 1341.92 1344.29 1344.14 10.65 21.13 5.472 5.198 5.368 5.259 0.378 0.380 0.379 -5.01 -9.76 168 104 1351.31 1353.74 9.39 21.89 5.502 5.211 5.393 5.272 0.363 0.368 0.365 -4.68 -10.36 170 106 1360.32 1362.71 9.01 23.02 5.529 5.220 5.414 5.281 0.343 0.349 0.345 -4.51 -10.92 172 108 1368.97 1371.37 8.65 23.82 5.558 5.228 5.437 5.288 0.323 0.331 0.326 -4.33 -11.41 174 110 1377.34 1379.77 8.37 24.60 5.588 5.236 5.461 5.297 0.305 0.314 0.308 -4.16 -11.87 176 112 1385.28 1387.73 7.94 25.50 5.617 5.248 5.486 5.308 0.291 0.299 0.294 -3.70 -12.36 178 114 1392.05 1394.17 6.77 25.96 5.627 5.230 5.488 5.291 -0.203 -0.203 -0.203 -4.02 -12.58 180 116 1399.67 1401.80 7.62 26.69 5.652 5.241 5.510 5.302 -0.188 -0.190 -0.189 -3.76 -12.96 182 118 1406.92 1409.09 7.24 27.14 5.675 5.246 5.528 5.306 -0.155 -0.161 -0.157 -3.74 -13.22 184 120 1414.31 1416.29 7.39 27.58 5.697 5.250 5.545 5.310 -0.115 -0.124 -0.118 -3.83 -13.45 186 122 1421.93 1423.68 7.61 27.91 5.721 5.251 5.564 5.311 0.061 0.076 0.066 -4.10 -13.63 188 124 1430.20 1430.20 8.28 28.59 5.744 5.260 5.584 5.321 0.000 0.000 0.000 -4.19 -13.99 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 190 126 1438.54 1438.54 8.34 29.49 5.769 5.275 5.607 5.336 0.000 0.000 0.000 -3.00 -14.43 192 128 1440.23 1440.23 1.69 30.07 5.810 5.290 5.642 5.350 0.000 0.000 0.000 -0.92 -14.73 194 130 1442.11 1443.48 1.89 30.84 5.863 5.317 5.688 5.376 0.107 0.096 0.104 -1.41 -15.10 196 132 1445.22 1446.53 3.10 31.81 5.911 5.352 5.734 5.412 0.161 0.149 0.157 -1.60 -15.54 198 134 1448.04 1449.59 2.82 32.54 5.952 5.376 5.773 5.436 0.186 0.171 0.181 -1.40 -15.91 200 136 1450.62 1452.32 2.59 33.21 5.994 5.398 5.810 5.457 0.208 0.188 0.202 -1.33 -16.26 202 138 1453.11 1454.87 2.48 33.84 6.036 5.422 5.849 5.481 0.231 0.210 0.225 -1.28 -16.62 204 140 1455.93 1457.88 2.82 34.63 6.120 5.503 5.933 5.561 0.355 0.352 0.354 -1.59 -16.83 206 142 1458.81 1460.81 2.88 35.38 6.158 5.528 5.969 5.586 0.369 0.365 0.368 -1.36 -17.21 208 144 1461.23 1463.27 2.41 36.05 6.191 5.546 6.000 5.603 0.373 0.367 0.371 -1.15 -17.55 210 146 1463.26 1465.33 2.04 36.59 6.222 5.559 6.028 5.616 0.371 0.362 0.368 -1.00 -17.85 212 148 1465.02 1467.11 1.76 36.82 6.256 5.573 6.058 5.630 0.370 0.360 0.367 -0.88 -18.14 214 150 1466.59 1468.68 1.57 37.04 6.290 5.588 6.088 5.645 0.371 0.358 0.367 -0.79 -18.44 216 152 1467.99 1470.06 1.41 37.44 6.328 5.606 6.123 5.662 0.380 0.362 0.375 -0.70 -18.72 218 154 1469.25 1471.24 1.26 38.07 6.379 5.629 6.168 5.686 0.410 0.378 0.400 -0.61 -18.98 220 156 1470.26 1472.14 1.01 38.65 6.415 5.645 6.201 5.701 0.416 0.380 0.405 -0.46 -19.25 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 222 158 1471.38 1473.26 1.12 39.43 6.399 5.578 6.173 5.635 -0.247 -0.230 -0.242 -0.48 -19.39 224 160 1472.15 1473.92 0.77 39.96 6.428 5.590 6.200 5.647 -0.239 -0.224 -0.234 -0.38 -19.66 226 162 1472.67 1474.38 0.52 40.45 6.457 5.603 6.227 5.660 -0.230 -0.218 -0.226 -0.24 -19.92 228 164 1472.91 1474.69 0.25 40.83 6.485 5.612 6.252 5.669 -0.214 -0.208 -0.212 -0.15 -20.12 230 166 1473.05 1474.82 0.14 41.13 6.512 5.620 6.276 5.677 -0.194 -0.194 -0.194 -0.12 -20.29 232 168 1473.13 1474.80 0.08 41.18 6.539 5.629 6.301 5.685 -0.173 -0.181 -0.175 -0.07 -20.44 238 174 1473.37 1475.06 0.30 41.65 6.619 5.630 6.368 5.686 -0.042 -0.075 -0.051 -0.14 -20.57 240 176 1473.57 1475.11 0.21 42.40 6.643 5.653 6.394 5.710 0.059 0.094 0.068 -0.10 -20.87 242 178 1473.58 1474.99 0.01 42.93 6.665 5.675 6.418 5.731 0.064 0.101 0.074 0.08 -21.19 σ 2.91 1.07 0.017 Z = 66 (Dy) 138 72 1095.60 1098.21 0.93 5.009 5.028 5.019 5.092 0.421 0.421 0.421 -11.95 0.03 140 74 1118.16 1120.88 22.56 2.20 5.020 5.022 5.021 5.085 0.375 0.384 0.379 -11.30 -0.59 142 76 1140.89 1143.51 22.72 3.35 4.980 4.962 4.972 5.026 -0.183 -0.204 -0.193 -11.77 -1.34 144 78 1164.12 1166.56 1167.20 23.23 4.53 4.998 4.961 4.981 5.025 -0.153 -0.174 -0.162 -11.55 -1.89 146 80 1186.89 1189.29 1189.33 22.78 5.60 5.018 4.960 4.992 5.024 5.044 -0.132 -0.152 -0.141 -10.81 -2.46 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 148 82 1210.58 1210.58 1210.78 23.68 6.28 5.031 4.952 4.996 5.016 5.046 0.000 0.000 0.000 -9.96 -2.83 150 84 1225.53 1227.55 1228.37 14.95 7.66 5.079 4.983 5.037 5.046 5.071 -0.078 -0.097 -0.087 -7.95 -3.52 152 86 1242.02 1243.98 1245.32 16.49 9.05 5.131 5.020 5.083 5.083 5.095 0.157 0.177 0.165 -8.45 -4.14 154 88 1258.79 1260.70 1261.74 16.77 10.25 5.178 5.050 5.124 5.113 5.124 0.205 0.223 0.213 -8.20 -4.72 156 90 1274.73 1276.90 1278.02 15.95 11.06 5.229 5.084 5.168 5.147 5.162 0.259 0.276 0.266 -7.99 -5.16 158 92 1290.70 1292.90 1294.04 15.97 11.84 5.286 5.125 5.219 5.187 5.182 0.321 0.336 0.327 -7.82 -5.49 160 94 1305.72 1308.15 1309.45 15.02 13.06 5.323 5.145 5.250 5.206 5.195 0.332 0.346 0.338 -7.47 -6.04 162 96 1320.34 1322.80 1324.10 14.62 14.27 5.360 5.164 5.281 5.226 5.207 0.343 0.353 0.347 -7.23 -6.61 164 98 1334.43 1336.82 1338.03 14.09 15.39 5.398 5.185 5.313 5.246 5.222 0.355 0.363 0.358 -6.90 -7.17 166 100 1347.82 1349.74 1350.79 13.38 16.55 5.435 5.202 5.344 5.264 0.365 0.368 0.366 -6.37 -7.74 168 102 1359.65 1362.18 1362.90 11.84 17.73 5.468 5.221 5.372 5.281 0.366 0.368 0.367 -5.67 -8.39 170 104 1370.52 1373.02 10.87 19.21 5.495 5.232 5.394 5.292 0.350 0.355 0.351 -5.40 -9.10 172 106 1380.97 1383.34 10.45 20.65 5.523 5.244 5.417 5.304 0.334 0.342 0.337 -5.12 -9.79 174 108 1390.75 1393.18 9.78 21.78 5.554 5.254 5.442 5.315 0.320 0.330 0.324 -4.84 -10.39 176 110 1400.14 1402.67 9.40 22.80 5.585 5.265 5.467 5.326 0.306 0.319 0.311 -4.67 -10.94 178 112 1409.21 1411.63 9.06 23.93 5.615 5.279 5.493 5.339 0.295 0.308 0.300 -4.10 -11.53 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 180 114 1416.41 1418.77 7.21 24.36 5.666 5.305 5.536 5.365 0.334 0.334 0.334 -3.74 -11.77 182 116 1423.68 1426.06 7.26 24.00 5.722 5.339 5.586 5.398 0.376 0.363 0.371 -3.60 -12.06 184 118 1432.55 1434.73 8.88 25.63 5.671 5.277 5.533 5.337 -0.174 -0.182 -0.177 -3.95 -12.43 186 120 1440.37 1442.46 7.81 26.05 5.691 5.279 5.548 5.339 -0.130 -0.143 -0.135 -4.10 -12.68 188 122 1448.51 1450.32 8.15 26.58 5.713 5.284 5.566 5.344 -0.094 -0.105 -0.098 -4.16 -13.00 190 124 1457.24 1457.24 8.73 27.03 5.735 5.284 5.582 5.344 0.000 0.000 0.000 -4.63 -13.22 192 126 1466.43 1466.43 9.19 27.89 5.760 5.298 5.605 5.358 0.000 0.000 0.000 -2.96 -13.66 194 128 1468.72 1468.72 2.29 28.49 5.800 5.313 5.639 5.373 0.000 0.000 0.000 -1.21 -13.97 196 130 1470.99 1472.87 2.27 28.87 5.842 5.334 5.676 5.394 -0.057 -0.064 -0.060 -1.36 -14.32 198 132 1475.38 1476.71 4.39 30.16 5.900 5.381 5.732 5.440 0.164 0.161 0.163 -1.99 -14.71 200 134 1478.94 1480.55 3.57 30.91 5.941 5.405 5.769 5.464 0.188 0.183 0.186 -1.76 -15.07 202 136 1482.26 1484.02 3.31 31.63 5.981 5.429 5.807 5.487 0.211 0.202 0.208 -1.69 -15.43 204 138 1485.48 1487.33 3.23 32.38 6.023 5.456 5.846 5.515 0.238 0.227 0.234 -1.67 -15.79 206 140 1488.63 1490.65 3.15 32.70 6.112 5.537 5.934 5.595 0.361 0.365 0.362 -1.98 -15.94 208 142 1492.33 1494.35 3.70 33.52 6.157 5.572 5.978 5.630 0.387 0.395 0.389 -1.73 -16.32 210 144 1495.36 1497.42 3.02 34.13 6.184 5.583 6.002 5.640 0.382 0.386 0.383 -1.44 -16.64 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 212 146 1498.08 1500.22 2.72 34.82 6.259 5.632 6.071 5.689 0.447 0.440 0.445 -1.31 -16.97 214 148 1500.41 1502.61 2.33 35.39 6.290 5.645 6.099 5.702 0.446 0.436 0.443 -1.16 -17.26 216 150 1502.50 1504.71 2.09 35.92 6.320 5.656 6.124 5.712 0.442 0.429 0.438 -1.06 -17.54 218 152 1504.54 1506.34 2.04 36.55 6.288 5.569 6.079 5.626 -0.266 -0.248 -0.261 -1.06 -17.79 220 154 1506.37 1508.23 1.83 37.12 6.318 5.582 6.107 5.639 -0.262 -0.246 -0.257 -0.90 -18.09 222 156 1507.95 1509.88 1.58 37.69 6.347 5.594 6.133 5.651 -0.255 -0.240 -0.251 -0.82 -18.39 224 158 1509.41 1511.32 1.47 38.04 6.377 5.606 6.160 5.663 -0.247 -0.234 -0.244 -0.75 -18.68 226 160 1510.74 1512.53 1.32 38.59 6.406 5.619 6.186 5.675 -0.241 -0.229 -0.237 -0.65 -18.95 228 162 1511.80 1513.50 1.07 39.13 6.435 5.632 6.213 5.689 -0.234 -0.226 -0.232 -0.48 -19.23 230 164 1512.48 1514.23 0.68 39.57 6.462 5.644 6.238 5.700 -0.223 -0.219 -0.222 -0.33 -19.45 232 166 1512.96 1514.76 0.47 39.91 6.488 5.653 6.262 5.709 -0.205 -0.208 -0.206 -0.28 -19.64 234 168 1513.36 1515.09 0.40 40.23 6.515 5.662 6.286 5.718 -0.187 -0.196 -0.189 -0.23 -19.81 236 170 1513.64 1515.28 0.28 40.55 6.541 5.671 6.310 5.727 -0.169 -0.184 -0.173 -0.15 -19.98 238 172 1513.78 1515.44 0.14 40.71 6.566 5.677 6.332 5.733 -0.140 -0.164 -0.147 -0.15 -20.11 240 174 1514.00 1515.59 0.21 40.63 6.591 5.676 6.353 5.732 -0.098 -0.133 -0.107 -0.23 -20.18 242 176 1514.59 1516.14 0.59 41.01 6.620 5.679 6.377 5.736 0.067 0.108 0.078 -0.42 -20.26 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 244 178 1515.23 1516.62 0.65 41.65 6.642 5.699 6.401 5.755 0.068 0.111 0.080 -0.23 -20.57 246 180 1515.47 1516.71 0.24 42.27 6.659 5.718 6.420 5.773 0.060 0.099 0.070 -0.02 -20.88 250 184 1515.57 1515.57 0.19 43.41 6.685 5.755 6.453 5.811 0.000 0.000 0.000 -0.97 -21.48 252 186 1513.59 1513.59 -1.98 43.46 6.768 5.755 6.518 5.810 0.000 0.000 0.000 0.96 -21.50 σ 3.11 1.00 0.018 Z = 68 (Er) 142 74 1117.99 1120.60 -0.17 4.974 5.001 4.987 5.065 -0.222 -0.239 -0.230 -12.50 0.25 144 76 1142.54 1145.06 24.56 1.66 4.990 4.999 4.994 5.063 -0.189 -0.211 -0.199 -12.32 -0.35 146 78 1166.89 1169.28 1169.53 24.34 2.77 5.008 4.996 5.002 5.060 -0.157 -0.181 -0.168 -12.13 -0.96 148 80 1190.77 1193.19 1192.83 23.88 3.87 5.026 4.995 5.012 5.058 -0.136 -0.158 -0.146 -11.22 -1.57 150 82 1215.14 1215.14 1215.33 24.37 4.56 5.038 4.984 5.013 5.048 5.055 0.000 0.000 0.000 -10.61 -2.02 152 84 1231.56 1233.51 1234.14 16.42 6.03 5.086 5.016 5.054 5.079 5.084 -0.085 -0.106 -0.094 -8.66 -2.67 154 86 1249.23 1251.16 1252.39 17.67 7.21 5.135 5.050 5.098 5.113 5.113 0.155 0.176 0.164 -9.05 -3.24 156 88 1267.15 1269.02 1270.14 17.92 8.36 5.182 5.079 5.137 5.141 5.143 0.200 0.217 0.207 -8.75 -3.77 158 90 1284.03 1286.22 1287.37 16.89 9.30 5.226 5.106 5.175 5.168 5.176 0.234 0.249 0.241 -8.37 -4.28 160 92 1300.58 1302.86 1304.28 16.55 9.88 5.276 5.137 5.217 5.199 5.205 0.282 0.291 0.286 -8.23 -4.64 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 162 94 1316.71 1319.08 1320.69 16.13 10.99 5.319 5.163 5.254 5.225 5.225 0.308 0.317 0.312 -8.01 -5.13 164 96 1332.42 1334.84 1336.44 15.71 12.08 5.358 5.187 5.288 5.248 5.239 0.328 0.336 0.331 -7.78 -5.64 166 98 1347.63 1350.06 1351.56 15.21 13.19 5.399 5.211 5.323 5.272 5.252 0.348 0.355 0.351 -7.47 -6.18 168 100 1362.19 1364.38 1365.77 14.56 14.37 5.435 5.230 5.353 5.290 5.264 0.358 0.361 0.359 -6.98 -6.76 170 102 1375.37 1377.97 1379.03 13.18 15.71 5.466 5.246 5.379 5.306 5.279 0.357 0.360 0.358 -6.36 -7.42 172 104 1387.66 1390.27 1391.55 12.29 17.14 5.492 5.256 5.400 5.317 0.341 0.346 0.343 -6.10 -8.13 174 106 1399.52 1401.95 11.86 18.55 5.520 5.269 5.423 5.329 0.327 0.335 0.330 -5.76 -8.82 176 108 1410.50 1413.11 10.98 19.75 5.551 5.281 5.448 5.341 0.315 0.326 0.320 -5.42 -9.43 178 110 1421.07 1423.77 10.57 20.93 5.582 5.293 5.474 5.353 0.304 0.318 0.309 -5.24 -10.01 180 112 1431.35 1433.86 10.28 22.15 5.613 5.307 5.499 5.367 0.296 0.311 0.301 -4.59 -10.62 182 114 1439.11 1441.83 7.75 22.69 5.636 5.313 5.517 5.373 0.273 0.293 0.281 -3.92 -10.92 184 116 1447.99 1450.05 8.88 24.31 5.645 5.296 5.518 5.356 -0.200 -0.207 -0.203 -4.49 -11.16 186 118 1456.54 1458.68 8.55 23.98 5.668 5.305 5.538 5.365 -0.185 -0.194 -0.188 -4.25 -11.55 188 120 1464.85 1466.99 8.31 24.48 5.686 5.306 5.552 5.366 -0.141 -0.155 -0.146 -4.38 -11.87 190 122 1473.64 1475.50 8.79 25.13 5.707 5.310 5.568 5.370 -0.102 -0.115 -0.107 -4.50 -12.24 192 124 1482.72 1482.72 9.09 25.49 5.727 5.307 5.582 5.367 0.000 0.000 0.000 -5.08 -12.48 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 194 126 1492.85 1492.85 10.13 26.42 5.752 5.320 5.604 5.380 0.000 0.000 0.000 -3.35 -12.92 196 128 1495.74 1495.74 2.89 27.02 5.791 5.337 5.637 5.396 0.000 0.000 0.000 -1.52 -13.24 198 130 1499.15 1500.54 3.41 28.17 5.842 5.369 5.684 5.429 0.113 0.115 0.114 -2.22 -13.56 200 132 1503.84 1505.17 4.69 28.46 5.889 5.403 5.728 5.462 0.161 0.162 0.161 -2.33 -13.88 202 134 1508.12 1509.74 4.28 29.18 5.929 5.428 5.765 5.486 0.185 0.184 0.185 -2.12 -14.22 204 136 1512.17 1513.94 4.05 29.91 5.969 5.452 5.802 5.511 0.208 0.204 0.207 -2.05 -14.57 206 138 1516.12 1517.95 3.95 30.63 6.010 5.478 5.840 5.536 0.233 0.226 0.231 -2.01 -14.91 208 140 1520.10 1521.95 3.99 31.47 6.055 5.514 5.884 5.572 0.273 0.264 0.270 -2.06 -15.21 210 142 1524.02 1526.03 3.91 31.68 6.143 5.595 5.971 5.651 0.380 0.390 0.383 -2.07 -15.43 212 144 1527.91 1529.81 3.90 32.56 6.144 5.583 5.970 5.640 0.334 0.328 0.332 -1.77 -15.92 214 146 1531.10 1533.03 3.18 33.02 6.177 5.600 6.000 5.657 0.340 0.334 0.338 -1.55 -16.21 216 148 1533.95 1535.96 2.85 33.54 6.208 5.612 6.027 5.669 0.339 0.331 0.336 -1.45 -16.50 218 150 1536.68 1538.72 2.73 34.18 6.240 5.627 6.056 5.684 0.338 0.330 0.336 -1.39 -16.79 220 152 1539.30 1541.31 2.62 34.76 6.274 5.644 6.086 5.701 0.341 0.333 0.338 -1.29 -17.09 222 154 1541.68 1543.54 2.38 35.32 6.299 5.606 6.095 5.662 -0.260 -0.245 -0.256 -1.20 -17.24 224 156 1543.87 1545.78 2.19 35.92 6.328 5.619 6.121 5.675 -0.254 -0.241 -0.250 -1.11 -17.54 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 226 158 1545.93 1547.83 2.06 36.51 6.357 5.632 6.148 5.688 -0.248 -0.237 -0.245 -1.04 -17.83 228 160 1547.84 1549.64 1.91 37.10 6.386 5.645 6.175 5.701 -0.242 -0.233 -0.239 -0.94 -18.12 230 162 1549.48 1551.16 1.64 37.68 6.415 5.659 6.201 5.715 -0.236 -0.230 -0.235 -0.75 -18.40 232 164 1550.64 1552.37 1.16 38.16 6.442 5.672 6.226 5.728 -0.228 -0.225 -0.227 -0.54 -18.66 234 166 1551.49 1553.30 0.85 38.53 6.468 5.682 6.250 5.738 -0.213 -0.216 -0.214 -0.46 -18.87 236 168 1552.24 1554.01 0.75 38.88 6.493 5.691 6.273 5.747 -0.195 -0.205 -0.198 -0.42 -19.07 238 170 1552.90 1554.54 0.65 39.25 6.518 5.701 6.296 5.757 -0.178 -0.193 -0.182 -0.34 -19.28 240 172 1553.35 1554.99 0.46 39.57 6.542 5.709 6.317 5.764 -0.157 -0.177 -0.162 -0.27 -19.48 242 174 1553.80 1555.40 0.44 39.80 6.566 5.710 6.337 5.766 -0.121 -0.149 -0.129 -0.34 -19.64 244 176 1554.42 1556.03 0.63 39.83 6.597 5.708 6.362 5.764 0.079 0.123 0.091 -0.70 -19.69 246 178 1555.66 1557.06 1.24 40.42 6.621 5.723 6.385 5.779 0.072 0.118 0.085 -0.54 -19.97 248 180 1556.51 1557.71 0.85 41.04 6.639 5.740 6.405 5.795 0.063 0.106 0.074 -0.32 -20.27 250 182 1556.95 1556.95 0.44 41.58 6.645 5.751 6.414 5.807 0.000 0.000 0.000 -0.44 -20.57 252 184 1557.82 1557.82 0.86 42.24 6.664 5.773 6.436 5.829 0.000 0.000 0.000 -1.29 -20.90 254 186 1555.86 1555.86 -1.96 42.27 6.740 5.775 6.496 5.830 0.000 0.000 0.000 0.93 -20.93 σ 3.28 1.16 0.014 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) Z = 70 (Yb) 146 76 1142.02 1144.45 -0.52 4.998 5.032 5.015 5.095 -0.184 -0.206 -0.195 -13.00 0.76 148 78 1167.73 1170.06 25.70 0.84 5.015 5.028 5.021 5.092 -0.151 -0.174 -0.162 -12.78 -0.03 150 80 1192.88 1195.35 25.15 2.11 5.033 5.026 5.030 5.089 -0.132 -0.153 -0.142 -11.80 -0.69 152 82 1218.15 1218.15 1218.35 25.27 3.01 5.044 5.016 5.032 5.080 5.042 0.000 0.000 0.000 -11.15 -1.24 154 84 1235.86 1237.74 1238.15 17.72 4.30 5.091 5.046 5.071 5.109 5.088 -0.082 -0.103 -0.092 -9.24 -1.85 156 86 1254.70 1256.57 1257.63 18.84 5.47 5.140 5.079 5.112 5.141 5.122 0.149 0.169 0.158 -9.58 -2.38 158 88 1273.61 1275.44 1276.51 18.90 6.46 5.185 5.105 5.150 5.168 5.150 0.191 0.207 0.198 -9.27 -2.85 160 90 1291.57 1293.73 1294.81 17.97 7.54 5.226 5.130 5.184 5.192 5.178 0.216 0.230 0.222 -8.89 -3.39 162 92 1308.98 1311.31 1312.61 17.41 8.40 5.268 5.153 5.218 5.215 5.205 0.242 0.252 0.246 -8.66 -3.91 164 94 1326.02 1328.38 1329.94 17.04 9.31 5.311 5.178 5.254 5.239 5.231 0.274 0.279 0.276 -8.49 -4.35 166 96 1342.73 1345.07 1346.67 16.72 10.31 5.355 5.206 5.293 5.267 5.253 0.307 0.311 0.309 -8.28 -4.79 168 98 1358.98 1361.40 1362.80 16.24 11.35 5.403 5.240 5.335 5.300 5.270 0.343 0.350 0.346 -8.02 -5.29 170 100 1374.66 1376.90 1378.12 15.68 12.47 5.439 5.259 5.366 5.320 5.285 0.355 0.361 0.357 -7.57 -5.80 172 102 1389.13 1391.73 1392.76 14.47 13.76 5.466 5.271 5.387 5.331 5.300 0.348 0.351 0.349 -7.05 -6.35 174 104 1402.93 1405.51 1406.59 13.80 15.27 5.491 5.282 5.408 5.342 5.311 0.334 0.340 0.336 -6.83 -6.96 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 176 106 1416.27 1418.65 1419.28 13.34 16.75 5.519 5.296 5.431 5.356 5.322 0.324 0.333 0.328 -6.43 -7.58 178 108 1428.50 1431.12 1431.61 12.23 18.00 5.550 5.309 5.456 5.369 0.314 0.326 0.319 -6.02 -8.14 180 110 1440.26 1442.96 11.76 19.19 5.581 5.322 5.482 5.382 0.304 0.319 0.310 -5.83 -8.69 182 112 1451.75 1454.25 11.48 20.39 5.611 5.335 5.507 5.395 0.296 0.313 0.303 -5.06 -9.22 184 114 1460.09 1462.78 8.35 20.99 5.639 5.345 5.529 5.405 0.284 0.303 0.291 -4.18 -9.70 186 116 1468.64 1471.00 8.55 20.65 5.637 5.329 5.523 5.389 0.205 0.224 0.212 -4.75 -10.48 188 118 1478.63 1480.73 9.99 22.09 5.663 5.330 5.541 5.390 -0.186 -0.195 -0.190 -4.63 -10.54 190 120 1487.66 1489.82 9.03 22.81 5.680 5.330 5.554 5.390 -0.142 -0.155 -0.147 -4.77 -11.02 192 122 1497.24 1499.14 9.58 23.60 5.701 5.333 5.570 5.393 -0.104 -0.117 -0.108 -4.91 -11.47 194 124 1506.92 1508.47 9.68 24.20 5.722 5.343 5.588 5.403 -0.085 -0.093 -0.088 -4.72 -11.93 196 126 1517.78 1517.78 10.86 24.92 5.745 5.343 5.605 5.402 0.000 0.000 0.000 -4.31 -12.20 198 128 1521.33 1521.33 3.56 25.59 5.783 5.360 5.637 5.419 0.000 0.000 0.000 -1.85 -12.53 200 130 1525.08 1526.88 3.75 25.93 5.825 5.387 5.676 5.446 -0.074 -0.089 -0.079 -2.14 -12.86 202 132 1530.67 1531.99 5.58 26.83 5.878 5.423 5.724 5.482 0.155 0.157 0.156 -2.64 -13.07 204 134 1535.62 1537.21 4.95 27.49 5.918 5.448 5.761 5.506 0.180 0.179 0.180 -2.46 -13.39 206 136 1540.36 1542.09 4.75 28.19 5.957 5.472 5.797 5.530 0.202 0.200 0.202 -2.40 -13.72 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 208 138 1544.97 1546.77 4.61 28.86 5.997 5.497 5.833 5.554 0.225 0.219 0.223 -2.33 -14.03 210 140 1549.51 1551.35 4.54 29.41 6.040 5.530 5.875 5.587 0.261 0.253 0.258 -2.35 -14.31 212 142 1554.39 1556.22 4.88 30.38 6.094 5.579 5.928 5.636 0.310 0.308 0.310 -2.38 -14.70 214 144 1558.90 1560.74 4.50 30.98 6.134 5.609 5.967 5.666 0.334 0.332 0.333 -2.10 -15.07 216 146 1562.68 1564.59 3.78 31.58 6.164 5.622 5.994 5.679 0.335 0.331 0.333 -1.85 -15.41 218 148 1566.13 1568.12 3.45 32.18 6.193 5.635 6.019 5.691 0.331 0.325 0.329 -1.75 -15.74 220 150 1569.46 1571.48 3.32 32.78 6.224 5.648 6.047 5.705 0.330 0.322 0.327 -1.68 -16.05 222 152 1572.67 1574.66 3.22 33.37 6.256 5.664 6.076 5.721 0.331 0.323 0.329 -1.60 -16.36 224 154 1575.66 1577.52 2.99 33.98 6.287 5.680 6.104 5.736 0.332 0.324 0.330 -1.40 -16.66 226 156 1578.14 1580.06 2.49 34.27 6.314 5.690 6.127 5.746 0.322 0.315 0.320 -1.19 -16.97 228 158 1580.57 1582.47 2.42 34.64 6.341 5.661 6.140 5.717 -0.249 -0.241 -0.247 -1.32 -16.84 230 160 1583.05 1584.88 2.49 35.22 6.370 5.674 6.166 5.730 -0.243 -0.237 -0.241 -1.22 -17.11 232 162 1585.29 1587.00 2.24 35.81 6.398 5.688 6.192 5.744 -0.237 -0.233 -0.236 -1.04 -17.40 234 164 1587.02 1588.74 1.73 36.38 6.424 5.701 6.217 5.757 -0.230 -0.229 -0.230 -0.79 -17.69 236 166 1588.32 1590.12 1.30 36.83 6.449 5.711 6.239 5.767 -0.216 -0.220 -0.217 -0.68 -17.95 238 168 1589.50 1591.29 1.18 37.26 6.473 5.718 6.261 5.774 -0.198 -0.206 -0.200 -0.65 -18.21 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 240 170 1590.64 1592.30 1.13 37.74 6.497 5.726 6.282 5.782 -0.179 -0.192 -0.183 -0.59 -18.50 242 172 1591.57 1593.19 0.94 38.22 6.520 5.734 6.303 5.790 -0.161 -0.176 -0.165 -0.49 -18.78 244 174 1592.40 1594.05 0.83 38.61 6.543 5.736 6.322 5.792 -0.129 -0.151 -0.135 -0.54 -19.03 246 176 1593.42 1594.91 1.01 38.99 6.565 5.741 6.342 5.797 -0.099 -0.125 -0.107 -0.57 -19.27 248 178 1594.89 1596.34 1.47 39.23 6.599 5.747 6.370 5.802 0.075 0.122 0.088 -0.83 -19.37 250 180 1596.35 1597.55 1.47 39.84 6.618 5.761 6.390 5.816 0.063 0.108 0.076 -0.63 -19.67 252 182 1597.41 1598.08 1.05 40.45 6.634 5.777 6.408 5.832 0.048 0.084 0.058 -0.39 -20.00 254 184 1598.91 1598.91 1.50 41.09 6.645 5.792 6.421 5.847 0.000 0.000 0.000 -1.62 -20.33 256 186 1597.03 1597.03 -1.88 41.16 6.711 5.795 6.473 5.850 0.000 0.000 0.000 0.89 -20.38 σ 3.26 1.09 0.025 Z = 72 (Hf) 152 80 1193.26 1195.79 0.38 5.040 5.056 5.047 5.119 -0.123 -0.141 -0.131 -12.51 0.13 154 82 1219.67 1219.67 26.41 1.52 5.052 5.048 5.050 5.111 0.000 0.000 0.000 -11.84 -0.51 156 84 1238.57 1240.40 1240.62 18.91 2.71 5.097 5.075 5.087 5.138 -0.075 -0.092 -0.083 -9.75 -1.08 158 86 1258.48 1260.25 1261.04 19.90 3.78 5.144 5.106 5.127 5.168 0.141 0.158 0.149 -10.06 -1.54 160 88 1278.31 1280.13 1281.02 19.83 4.70 5.187 5.131 5.162 5.193 0.180 0.193 0.186 -9.77 -1.97 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 162 90 1297.39 1299.46 1300.39 19.08 5.82 5.228 5.154 5.195 5.216 0.203 0.214 0.208 -9.44 -2.48 164 92 1315.87 1318.07 1319.19 18.48 6.89 5.267 5.177 5.228 5.238 0.225 0.234 0.229 -9.15 -2.97 166 94 1333.81 1336.04 1337.37 17.93 7.79 5.308 5.199 5.261 5.260 0.251 0.255 0.253 -8.91 -3.38 168 96 1351.35 1353.56 1355.01 17.54 8.61 5.352 5.225 5.298 5.286 0.286 0.286 0.286 -8.73 -3.80 170 98 1368.58 1370.88 1372.05 17.24 9.60 5.408 5.268 5.349 5.329 5.290 0.338 0.346 0.342 -8.50 -4.42 172 100 1385.18 1387.37 1388.34 16.60 10.52 5.448 5.293 5.384 5.353 5.307 0.357 0.367 0.361 -8.05 -4.88 174 102 1400.55 1403.04 1403.92 15.36 11.42 5.474 5.303 5.404 5.363 5.320 0.348 0.354 0.350 -7.51 -5.35 176 104 1415.41 1417.83 1418.80 14.87 12.49 5.484 5.295 5.408 5.355 5.329 0.306 0.302 0.305 -7.40 -5.81 178 106 1429.87 1432.04 1432.80 14.45 13.60 5.511 5.307 5.429 5.367 5.337 0.298 0.294 0.296 -6.95 -6.33 180 108 1443.10 1445.66 1446.29 13.24 14.60 5.539 5.319 5.452 5.379 5.347 0.287 0.286 0.286 -6.51 -6.87 182 110 1455.82 1458.52 1458.70 12.72 15.56 5.570 5.333 5.477 5.393 5.352 0.278 0.280 0.279 -6.30 -7.39 184 112 1467.93 1470.09 1470.29 12.11 16.19 5.599 5.342 5.500 5.401 0.267 0.269 0.268 -5.66 -7.93 186 114 1478.34 1480.80 1481.36 10.40 18.24 5.617 5.349 5.514 5.408 0.236 0.246 0.240 -5.21 -8.77 188 116 1488.67 1490.89 10.34 20.03 5.633 5.353 5.527 5.412 0.201 0.216 0.207 -5.24 -9.45 190 118 1498.84 1501.07 10.17 20.21 5.653 5.358 5.543 5.417 0.171 0.190 0.178 -5.03 -9.97 192 120 1508.75 1510.87 9.91 21.09 5.674 5.350 5.555 5.409 -0.133 -0.143 -0.137 -5.29 -10.20 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 194 122 1519.29 1521.21 10.54 22.05 5.695 5.355 5.572 5.415 -0.102 -0.113 -0.106 -5.36 -10.70 196 124 1529.88 1531.47 10.60 22.96 5.716 5.365 5.589 5.424 -0.083 -0.091 -0.086 -5.08 -11.17 198 126 1541.29 1541.29 11.41 23.52 5.739 5.364 5.605 5.424 0.000 0.000 0.000 -4.04 -11.49 200 128 1545.52 1545.52 4.23 24.19 5.776 5.383 5.638 5.442 0.000 0.000 0.000 -2.18 -11.84 202 130 1550.13 1551.54 4.61 25.04 5.822 5.411 5.679 5.470 0.098 0.103 0.100 -2.75 -12.08 204 132 1555.87 1557.21 5.75 25.21 5.867 5.441 5.720 5.499 0.146 0.146 0.146 -2.92 -12.30 206 134 1561.48 1563.04 5.61 25.86 5.906 5.465 5.756 5.524 0.171 0.169 0.171 -2.79 -12.58 208 136 1566.89 1568.56 5.41 26.53 5.945 5.490 5.792 5.548 0.194 0.189 0.192 -2.71 -12.88 210 138 1572.11 1573.88 5.22 27.14 5.984 5.513 5.827 5.571 0.214 0.207 0.212 -2.62 -13.16 212 140 1577.18 1579.04 5.06 27.66 6.024 5.540 5.864 5.597 0.238 0.229 0.235 -2.57 -13.44 214 142 1582.76 1584.59 5.58 28.36 6.084 5.600 5.925 5.657 0.307 0.308 0.307 -2.76 -13.85 216 144 1588.01 1589.83 5.25 29.11 6.122 5.626 5.961 5.683 0.327 0.326 0.327 -2.48 -14.21 218 146 1592.57 1594.45 4.56 29.89 6.152 5.642 5.988 5.698 0.328 0.326 0.327 -2.22 -14.59 220 148 1596.76 1598.70 4.20 30.63 6.181 5.657 6.014 5.713 0.326 0.323 0.325 -2.10 -14.97 222 150 1600.76 1602.74 3.99 31.30 6.212 5.672 6.042 5.728 0.326 0.322 0.325 -1.99 -15.30 224 152 1604.56 1606.51 3.80 31.89 6.243 5.687 6.070 5.743 0.327 0.322 0.325 -1.89 -15.60 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 226 154 1608.12 1609.95 3.56 32.46 6.274 5.702 6.097 5.757 0.326 0.320 0.324 -1.70 -15.89 228 156 1611.22 1613.10 3.10 33.07 6.298 5.711 6.119 5.766 0.315 0.308 0.313 -1.50 -16.17 230 158 1614.00 1615.97 2.78 33.44 6.322 5.720 6.140 5.776 0.300 0.294 0.298 -1.39 -16.43 232 160 1616.62 1618.64 2.62 33.57 6.347 5.730 6.162 5.786 0.285 0.281 0.284 -1.32 -16.70 234 162 1619.13 1621.13 2.51 33.84 6.375 5.741 6.187 5.796 0.273 0.271 0.272 -1.26 -16.95 236 164 1621.52 1623.47 2.39 34.51 6.404 5.751 6.212 5.806 0.261 0.264 0.262 -1.19 -17.21 238 166 1623.73 1625.59 2.21 35.41 6.433 5.763 6.238 5.818 0.251 0.257 0.253 -1.03 -17.49 240 168 1625.44 1627.36 1.71 35.93 6.457 5.774 6.260 5.829 0.238 0.248 0.241 -0.74 -17.82 242 170 1626.79 1628.44 1.35 36.15 6.476 5.745 6.267 5.800 -0.173 -0.179 -0.175 -0.92 -17.78 244 172 1628.39 1629.98 1.60 36.81 6.499 5.754 6.288 5.809 -0.157 -0.165 -0.159 -0.78 -18.11 246 174 1629.78 1631.43 1.40 37.38 6.521 5.758 6.308 5.814 -0.130 -0.144 -0.134 -0.79 -18.41 248 176 1631.28 1632.81 1.50 37.87 6.544 5.764 6.328 5.819 -0.103 -0.122 -0.108 -0.82 -18.67 250 178 1632.94 1634.44 1.65 38.05 6.576 5.770 6.354 5.825 0.078 0.122 0.091 -1.09 -18.78 252 180 1634.97 1636.23 2.04 38.62 6.598 5.781 6.375 5.836 0.062 0.104 0.074 -0.96 -19.06 254 182 1636.70 1637.38 1.72 39.29 6.615 5.796 6.394 5.851 0.047 0.082 0.057 -0.73 -19.40 256 184 1638.85 1638.85 2.15 39.94 6.626 5.810 6.407 5.864 0.000 0.000 0.000 -0.08 -19.76 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 258 186 1637.09 1637.09 -1.76 40.06 6.681 5.815 6.451 5.869 0.000 0.000 0.000 0.83 -19.83 σ 3.07 0.90 0.037 Z = 74 (W) 156 82 1219.79 1219.79 0.12 5.059 5.079 5.068 5.142 0.000 0.000 0.000 -12.54 0.21 158 84 1239.69 1241.59 19.90 1.11 5.101 5.102 5.102 5.165 0.058 0.070 0.064 -10.20 -0.37 160 86 1260.60 1262.29 1262.85 20.91 2.12 5.147 5.132 5.140 5.194 0.128 0.141 0.134 -10.48 -0.71 162 88 1281.26 1283.07 1283.66 20.66 2.95 5.189 5.155 5.174 5.217 0.163 0.172 0.167 -10.22 -1.09 164 90 1301.32 1303.27 1304.04 20.06 3.93 5.228 5.176 5.205 5.237 0.185 0.191 0.188 -9.91 -1.52 166 92 1320.67 1322.78 1323.83 19.35 4.79 5.266 5.195 5.234 5.257 0.203 0.205 0.204 -9.55 -1.93 168 94 1339.29 1341.55 1342.98 18.62 5.48 5.304 5.215 5.265 5.276 0.224 0.221 0.223 -9.25 -2.30 170 96 1358.04 1360.23 1361.52 18.75 6.70 5.376 5.276 5.333 5.336 0.318 0.328 0.322 -9.40 -2.85 172 98 1376.36 1378.30 1379.47 18.32 7.77 5.415 5.298 5.365 5.358 0.338 0.348 0.342 -9.01 -3.33 174 100 1393.89 1396.00 1396.74 17.54 8.71 5.450 5.316 5.394 5.376 0.346 0.353 0.349 -8.50 -3.81 176 102 1410.25 1412.60 1413.30 16.36 9.70 5.480 5.332 5.418 5.391 0.344 0.351 0.347 -8.00 -4.34 178 104 1425.91 1428.27 1429.21 15.66 10.50 5.499 5.336 5.432 5.396 0.321 0.324 0.322 -7.80 -4.82 180 106 1441.24 1443.42 1444.58 15.32 11.37 5.516 5.337 5.443 5.396 5.349 0.297 0.294 0.296 -7.44 -5.22 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 182 108 1455.56 1458.25 1459.33 14.33 12.46 5.537 5.342 5.458 5.401 5.356 0.276 0.269 0.273 -7.07 -5.67 184 110 1469.46 1472.24 1472.93 13.90 13.64 5.564 5.352 5.480 5.412 5.366 0.263 0.257 0.260 -6.87 -6.16 186 112 1482.95 1485.45 1485.88 13.49 15.02 5.595 5.365 5.505 5.425 5.374 0.256 0.251 0.254 -6.32 -6.64 188 114 1494.69 1497.51 1498.18 11.73 16.35 5.611 5.371 5.518 5.430 0.224 0.226 0.225 -5.89 -7.44 190 116 1506.32 1508.90 1510.03 11.63 17.65 5.627 5.375 5.530 5.434 0.191 0.199 0.194 -5.88 -8.21 192 118 1517.81 1520.15 11.49 18.97 5.646 5.379 5.545 5.438 0.165 0.177 0.170 -5.53 -8.93 194 120 1528.40 1530.53 10.58 19.65 5.668 5.378 5.559 5.437 0.129 0.148 0.136 -5.45 -9.45 196 122 1539.81 1541.72 11.41 20.52 5.690 5.376 5.574 5.435 -0.098 -0.106 -0.101 -5.83 -9.92 198 124 1551.38 1552.99 11.57 21.49 5.711 5.385 5.591 5.444 -0.079 -0.086 -0.082 -5.45 -10.42 200 126 1563.45 1563.45 12.07 22.16 5.733 5.386 5.607 5.445 0.000 0.000 0.000 -5.79 -10.79 202 128 1568.36 1568.36 4.90 22.84 5.770 5.405 5.639 5.464 0.000 0.000 0.000 -2.53 -11.15 204 130 1573.44 1575.02 5.08 23.31 5.811 5.430 5.676 5.489 0.078 0.083 0.080 -2.89 -11.40 206 132 1579.58 1580.95 6.15 23.71 5.856 5.459 5.717 5.517 0.133 0.131 0.132 -3.16 -11.54 208 134 1585.74 1587.26 6.15 24.26 5.895 5.483 5.752 5.541 0.160 0.154 0.158 -3.07 -11.78 210 136 1591.72 1593.34 5.98 24.83 5.933 5.506 5.786 5.564 0.181 0.173 0.178 -2.99 -12.03 212 138 1597.48 1599.22 5.76 25.37 5.971 5.529 5.821 5.586 0.201 0.189 0.197 -2.88 -12.28 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 214 140 1603.17 1605.01 5.69 25.99 6.030 5.587 5.881 5.644 0.271 0.272 0.271 -3.20 -12.63 216 142 1609.51 1611.32 6.34 26.75 6.073 5.619 5.922 5.675 0.301 0.303 0.302 -3.11 -12.94 218 144 1615.48 1617.27 5.96 27.47 6.111 5.644 5.956 5.701 0.320 0.321 0.320 -2.85 -13.28 220 146 1620.81 1622.66 5.33 28.24 6.141 5.663 5.985 5.719 0.323 0.324 0.323 -2.61 -13.65 222 148 1625.81 1627.69 5.00 29.04 6.171 5.681 6.012 5.737 0.325 0.325 0.325 -2.47 -14.03 224 150 1630.51 1632.44 4.70 29.75 6.203 5.700 6.041 5.756 0.328 0.328 0.328 -2.31 -14.39 226 152 1634.93 1636.83 4.42 30.37 6.236 5.716 6.070 5.772 0.330 0.329 0.330 -2.18 -14.71 228 154 1639.06 1640.86 4.13 30.94 6.267 5.731 6.098 5.786 0.329 0.329 0.329 -1.98 -14.99 230 156 1642.67 1644.57 3.61 31.45 6.293 5.743 6.121 5.798 0.321 0.321 0.321 -1.75 -15.26 232 158 1645.93 1647.90 3.26 31.93 6.316 5.754 6.143 5.809 0.308 0.309 0.308 -1.62 -15.51 234 160 1648.98 1650.98 3.05 32.36 6.339 5.764 6.163 5.819 0.292 0.292 0.292 -1.54 -15.75 236 162 1651.91 1653.93 2.92 32.78 6.364 5.771 6.184 5.826 0.275 0.276 0.275 -1.48 -15.96 238 164 1654.76 1656.81 2.85 33.23 6.391 5.778 6.207 5.833 0.259 0.262 0.260 -1.44 -16.17 240 166 1657.52 1659.57 2.76 33.79 6.418 5.788 6.230 5.843 0.246 0.250 0.248 -1.34 -16.42 242 168 1659.98 1661.98 2.46 34.54 6.442 5.801 6.253 5.856 0.236 0.240 0.237 -1.02 -16.74 244 170 1661.62 1663.61 1.64 34.84 6.461 5.801 6.268 5.855 0.208 0.219 0.211 -0.85 -17.00 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 246 172 1663.88 1665.44 2.26 35.49 6.480 5.771 6.275 5.827 -0.151 -0.152 -0.152 -1.11 -17.45 248 174 1665.89 1667.52 2.01 36.10 6.502 5.778 6.295 5.833 -0.129 -0.136 -0.131 -1.06 -17.76 250 176 1667.93 1669.49 2.04 36.65 6.525 5.784 6.315 5.839 -0.103 -0.118 -0.108 -1.09 -18.03 252 178 1669.97 1671.38 2.04 37.03 6.547 5.795 6.335 5.850 -0.084 -0.101 -0.089 -1.03 -18.31 254 180 1672.40 1673.73 2.43 37.42 6.576 5.799 6.360 5.854 0.058 0.093 0.068 -1.29 -18.46 256 182 1674.82 1674.82 2.43 38.12 6.588 5.809 6.373 5.864 0.000 0.000 0.000 -1.43 -18.86 258 184 1677.69 1677.69 2.87 38.84 6.609 5.827 6.394 5.882 0.000 0.000 0.000 -0.29 -19.18 260 186 1676.10 1676.10 -1.59 39.01 6.655 5.834 6.432 5.889 0.000 0.000 0.000 0.74 -19.29 σ 3.20 0.95 0.047 Z = 76 (Os) 162 86 1261.12 1262.83 0.52 5.151 5.157 5.153 5.218 0.105 0.113 0.109 -10.83 0.04 164 88 1282.48 1284.35 1284.66 21.36 1.23 5.191 5.178 5.185 5.240 0.138 0.142 0.139 -10.60 -0.28 166 90 1303.31 1305.25 1305.81 20.83 2.00 5.228 5.198 5.214 5.259 0.161 0.160 0.161 -10.32 -0.62 168 92 1323.48 1325.58 1326.52 20.17 2.82 5.264 5.215 5.242 5.276 0.177 0.173 0.175 -9.97 -1.00 170 94 1342.94 1345.22 1346.59 19.45 3.65 5.299 5.233 5.269 5.293 0.189 0.182 0.185 -9.65 -1.42 172 96 1362.48 1364.65 1366.05 19.54 4.44 5.377 5.296 5.341 5.356 0.304 0.309 0.306 -9.83 -1.76 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 174 98 1381.75 1383.96 1384.95 19.27 5.40 5.417 5.321 5.375 5.381 0.327 0.331 0.329 -9.47 -2.20 176 100 1400.18 1402.43 1403.22 18.43 6.29 5.455 5.344 5.407 5.403 0.340 0.346 0.343 -9.01 -2.69 178 102 1417.70 1420.19 1420.78 17.52 7.46 5.487 5.362 5.434 5.421 0.342 0.349 0.345 -8.59 -3.26 180 104 1434.53 1436.90 1437.74 16.83 8.62 5.508 5.370 5.450 5.429 0.324 0.329 0.326 -8.31 -3.85 182 106 1450.74 1452.93 1454.13 16.21 9.51 5.527 5.373 5.464 5.432 0.306 0.308 0.307 -7.86 -4.34 184 108 1465.83 1468.49 1469.92 15.09 10.27 5.548 5.378 5.478 5.437 5.382 0.286 0.285 0.285 -7.43 -4.74 186 110 1480.44 1483.16 1484.81 14.61 10.98 5.569 5.380 5.493 5.439 5.391 0.263 0.258 0.261 -7.25 -5.05 188 112 1494.64 1497.15 1499.09 14.20 11.69 5.593 5.385 5.510 5.444 5.399 0.246 0.239 0.243 -6.82 -5.39 190 114 1508.05 1510.50 1512.80 13.41 13.36 5.599 5.377 5.511 5.436 5.406 0.197 0.190 0.194 -6.82 -6.16 192 116 1521.47 1523.74 1526.12 13.42 15.15 5.617 5.382 5.525 5.441 5.413 0.170 0.169 0.169 -6.68 -6.97 194 118 1534.50 1536.64 1538.81 13.03 16.69 5.638 5.390 5.542 5.449 0.150 0.153 0.151 -6.20 -7.68 196 120 1546.31 1548.30 1550.80 11.80 17.91 5.661 5.394 5.559 5.453 0.118 0.130 0.123 -5.99 -8.42 198 122 1558.81 1560.70 12.50 19.00 5.685 5.396 5.576 5.455 -0.093 -0.099 -0.095 -6.33 -9.14 200 124 1571.39 1572.98 12.58 20.01 5.706 5.405 5.593 5.463 -0.075 -0.079 -0.077 -5.89 -9.66 202 126 1584.25 1584.25 12.86 20.80 5.728 5.406 5.609 5.465 0.000 0.000 0.000 -6.12 -10.10 204 128 1589.88 1589.88 5.63 21.52 5.764 5.426 5.641 5.485 0.000 0.000 0.000 -2.88 -10.46 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 206 130 1595.48 1595.48 5.61 22.05 5.801 5.448 5.673 5.506 0.043 0.047 0.044 -2.97 -10.78 208 132 1601.83 1603.27 6.35 22.25 5.846 5.476 5.713 5.534 0.114 0.108 0.112 -3.34 -10.83 210 134 1608.42 1609.93 6.58 22.68 5.885 5.499 5.748 5.557 0.144 0.133 0.140 -3.31 -11.01 212 136 1614.86 1616.46 6.44 23.14 5.922 5.522 5.782 5.580 0.165 0.151 0.160 -3.23 -11.22 214 138 1621.09 1622.82 6.23 23.61 5.959 5.544 5.815 5.602 0.183 0.167 0.177 -3.13 -11.44 216 140 1627.49 1629.29 6.40 24.32 6.020 5.604 5.877 5.660 0.262 0.260 0.261 -3.50 -11.76 218 142 1634.39 1636.17 6.90 24.87 6.061 5.633 5.916 5.689 0.290 0.287 0.289 -3.40 -12.02 220 144 1641.00 1642.79 6.61 25.52 6.101 5.662 5.953 5.718 0.312 0.311 0.312 -3.19 -12.33 222 146 1647.03 1648.93 6.04 26.22 6.133 5.684 5.983 5.740 0.318 0.318 0.318 -2.97 -12.67 224 148 1652.78 1654.75 5.75 26.98 6.164 5.706 6.013 5.762 0.322 0.325 0.323 -2.84 -13.02 226 150 1658.25 1660.21 5.46 27.73 6.197 5.728 6.044 5.784 0.329 0.333 0.330 -2.66 -13.37 228 152 1663.30 1665.23 5.06 28.37 6.230 5.745 6.073 5.801 0.331 0.336 0.333 -2.47 -13.67 230 154 1668.01 1669.91 4.70 28.95 6.262 5.760 6.101 5.816 0.331 0.335 0.333 -2.27 -13.96 232 156 1672.23 1674.23 4.22 29.56 6.288 5.774 6.125 5.829 0.326 0.331 0.327 -2.04 -14.30 234 158 1676.07 1678.08 3.84 30.14 6.311 5.785 6.145 5.840 0.312 0.318 0.314 -1.90 -14.63 236 160 1679.68 1681.65 3.61 30.70 6.332 5.795 6.164 5.850 0.296 0.300 0.297 -1.78 -14.95 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 238 162 1683.04 1685.07 3.36 31.13 6.357 5.802 6.185 5.857 0.279 0.284 0.281 -1.68 -15.19 240 164 1686.28 1688.40 3.25 31.53 6.382 5.808 6.206 5.862 0.263 0.268 0.264 -1.64 -15.39 242 166 1689.47 1691.62 3.19 31.95 6.408 5.815 6.228 5.870 0.248 0.254 0.250 -1.58 -15.59 244 168 1692.50 1694.46 3.03 32.52 6.434 5.828 6.252 5.883 0.238 0.245 0.240 -1.26 -15.84 246 170 1695.02 1696.66 2.52 33.40 6.440 5.779 6.243 5.834 -0.160 -0.152 -0.157 -1.61 -16.40 248 172 1698.03 1699.56 3.01 34.15 6.463 5.789 6.264 5.844 -0.147 -0.142 -0.145 -1.44 -16.74 250 174 1700.67 1702.27 2.64 34.78 6.485 5.797 6.284 5.852 -0.127 -0.128 -0.128 -1.34 -17.05 252 176 1703.26 1704.84 2.59 35.33 6.507 5.804 6.303 5.858 -0.104 -0.112 -0.106 -1.36 -17.33 254 178 1705.88 1707.30 2.62 35.91 6.529 5.813 6.323 5.868 -0.085 -0.096 -0.088 -1.34 -17.64 256 180 1708.60 1709.97 2.72 36.21 6.555 5.817 6.344 5.872 0.051 0.076 0.058 -1.62 -17.86 258 182 1711.88 1711.88 3.27 37.06 6.571 5.827 6.361 5.882 0.000 0.000 0.000 -1.75 -18.29 260 184 1715.39 1715.39 3.51 37.70 6.592 5.844 6.383 5.898 0.000 0.000 0.000 -0.51 -18.60 262 186 1714.02 1714.02 -1.37 37.92 6.632 5.853 6.416 5.907 0.000 0.000 0.000 0.63 -18.72 σ 3.72 1.53 0.042 Z = 78 (Pt) 168 90 1303.72 1305.66 1305.97 0.41 5.229 5.219 5.224 5.280 0.124 0.118 0.121 -10.65 0.03 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 170 92 1324.58 1326.64 1327.40 20.86 1.10 5.263 5.235 5.250 5.296 0.139 0.129 0.135 -10.36 -0.31 172 94 1344.85 1347.03 1348.35 20.26 1.91 5.297 5.251 5.276 5.311 0.148 0.136 0.143 -10.05 -0.69 174 96 1364.92 1367.08 1368.70 20.08 2.44 5.378 5.317 5.351 5.377 0.290 0.289 0.289 -10.26 -0.83 176 98 1385.12 1387.35 1388.46 20.19 3.36 5.421 5.346 5.388 5.405 0.319 0.320 0.319 -9.95 -1.31 178 100 1404.54 1406.87 1407.67 19.43 4.36 5.460 5.369 5.420 5.428 5.373 0.333 0.337 0.335 -9.53 -1.80 180 102 1423.19 1425.71 1426.24 18.65 5.49 5.491 5.387 5.446 5.446 5.389 0.334 0.339 0.336 -9.18 -2.33 182 104 1441.25 1443.60 1444.13 18.05 6.71 5.515 5.399 5.466 5.458 5.397 0.323 0.329 0.326 -8.85 -2.90 184 106 1458.41 1460.65 1461.43 17.17 7.67 5.535 5.404 5.480 5.463 5.402 0.307 0.311 0.309 -8.32 -3.38 186 108 1474.39 1477.01 1478.11 15.98 8.56 5.560 5.413 5.499 5.472 5.404 0.295 0.300 0.297 -7.81 -3.84 188 110 1489.64 1492.28 1494.21 15.25 9.20 5.582 5.417 5.514 5.476 5.405 0.275 0.277 0.276 -7.56 -4.22 190 112 1504.77 1506.91 1509.83 15.14 10.13 5.566 5.372 5.487 5.432 5.411 -0.165 -0.151 -0.159 -7.89 -5.59 192 114 1520.18 1522.15 1524.96 15.41 12.13 5.592 5.383 5.508 5.442 5.417 -0.159 -0.146 -0.153 -7.58 -6.10 194 116 1534.88 1536.78 1539.57 14.70 13.41 5.615 5.392 5.526 5.451 5.424 -0.150 -0.138 -0.145 -7.21 -6.66 196 118 1548.89 1550.86 1553.60 14.01 14.39 5.636 5.399 5.543 5.458 5.431 -0.132 -0.124 -0.129 -6.98 -7.26 198 120 1562.61 1564.61 1567.00 13.72 16.31 5.658 5.407 5.560 5.466 5.438 -0.109 -0.107 -0.108 -6.90 -7.82 200 122 1576.29 1578.18 1579.84 13.67 17.48 5.680 5.415 5.578 5.474 -0.087 -0.089 -0.088 -6.86 -8.37 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 202 124 1589.93 1591.42 1592.08 13.64 18.54 5.701 5.423 5.595 5.482 -0.070 -0.071 -0.070 -6.40 -8.90 204 126 1603.69 1603.69 13.75 19.43 5.724 5.426 5.612 5.485 0.000 0.000 0.000 -5.29 -9.38 206 128 1610.07 1610.07 6.38 20.19 5.759 5.447 5.643 5.505 0.000 0.000 0.000 -3.25 -9.76 208 130 1616.34 1616.34 6.27 20.86 5.794 5.467 5.673 5.525 0.000 0.000 0.000 -3.22 -10.14 210 132 1622.77 1624.45 6.43 20.94 5.833 5.491 5.708 5.549 0.074 0.069 0.072 -3.41 -10.26 212 134 1629.65 1631.19 6.88 21.23 5.873 5.515 5.744 5.572 0.119 0.102 0.113 -3.50 -10.33 214 136 1636.47 1638.08 6.83 21.61 5.910 5.537 5.777 5.594 0.141 0.121 0.134 -3.43 -10.50 216 138 1643.12 1644.84 6.65 22.03 5.946 5.558 5.809 5.616 0.160 0.137 0.152 -3.35 -10.70 218 140 1650.09 1651.86 6.97 22.59 6.009 5.618 5.872 5.674 0.248 0.240 0.245 -3.74 -10.93 220 142 1657.49 1659.28 7.41 23.10 6.051 5.648 5.911 5.704 0.278 0.271 0.276 -3.68 -11.19 222 144 1664.73 1666.51 7.24 23.73 6.092 5.679 5.950 5.735 0.304 0.299 0.302 -3.52 -11.49 224 146 1671.43 1673.33 6.70 24.40 6.123 5.700 5.979 5.756 0.309 0.306 0.308 -3.31 -11.82 226 148 1677.87 1679.81 6.43 25.08 6.154 5.722 6.008 5.778 0.314 0.313 0.313 -3.18 -12.14 228 150 1684.00 1685.91 6.14 25.76 6.186 5.745 6.039 5.800 0.321 0.321 0.321 -2.96 -12.44 230 152 1689.62 1691.55 5.61 26.31 6.218 5.761 6.067 5.817 0.322 0.323 0.323 -2.75 -12.72 232 154 1694.89 1696.86 5.28 26.89 6.250 5.777 6.095 5.833 0.322 0.324 0.323 -2.59 -13.00 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 234 156 1699.82 1701.85 4.92 27.59 6.277 5.793 6.120 5.848 0.318 0.321 0.319 -2.40 -13.34 236 158 1704.41 1706.42 4.60 28.35 6.301 5.807 6.142 5.862 0.307 0.311 0.308 -2.27 -13.72 238 160 1708.75 1710.65 4.34 29.07 6.324 5.820 6.163 5.875 0.294 0.299 0.296 -2.08 -14.09 240 162 1712.60 1714.64 3.85 29.56 6.349 5.829 6.185 5.883 0.280 0.287 0.282 -1.90 -14.36 242 164 1716.26 1718.42 3.66 29.97 6.375 5.835 6.206 5.890 0.265 0.274 0.268 -1.85 -14.59 244 166 1719.85 1722.05 3.60 30.38 6.400 5.842 6.227 5.897 0.251 0.260 0.254 -1.80 -14.81 246 168 1723.35 1725.30 3.50 30.85 6.428 5.853 6.251 5.908 0.240 0.251 0.244 -1.48 -15.05 248 170 1727.01 1728.67 3.66 31.99 6.424 5.798 6.234 5.853 -0.157 -0.145 -0.153 -1.92 -15.64 250 172 1730.66 1732.19 3.65 32.63 6.447 5.808 6.255 5.863 -0.144 -0.134 -0.141 -1.76 -15.94 252 174 1733.93 1735.51 3.28 33.27 6.468 5.816 6.273 5.871 -0.127 -0.121 -0.125 -1.65 -16.26 254 176 1737.12 1738.72 3.19 33.87 6.490 5.822 6.292 5.877 -0.103 -0.104 -0.104 -1.67 -16.58 256 178 1740.40 1741.86 3.28 34.52 6.511 5.831 6.312 5.886 -0.083 -0.087 -0.084 -1.69 -16.93 258 180 1743.65 1743.65 3.25 35.04 6.531 5.831 6.328 5.885 0.000 0.000 0.000 -2.10 -17.40 260 182 1747.82 1747.82 4.17 35.94 6.554 5.845 6.350 5.899 0.000 0.000 0.000 -2.06 -17.69 262 184 1751.94 1751.94 4.12 36.55 6.576 5.859 6.371 5.914 0.000 0.000 0.000 -0.76 -17.98 264 186 1750.81 1750.81 -1.13 36.80 6.613 5.870 6.402 5.924 0.000 0.000 0.000 0.50 -18.12 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) σ 3.74 1.73 0.049 Z = 80 (Hg) 170 90 1303.43 1305.17 -0.29 5.229 5.241 5.235 5.302 -0.081 -0.085 -0.083 -11.09 0.46 172 92 1325.13 1327.01 1326.74 21.70 0.55 5.262 5.257 5.260 5.317 -0.087 -0.088 -0.088 -10.82 -0.37 174 94 1346.30 1348.30 1348.46 21.17 1.45 5.294 5.272 5.284 5.332 -0.094 -0.093 -0.093 -10.56 -0.37 176 96 1366.94 1369.06 1369.75 20.64 2.02 5.325 5.286 5.307 5.346 -0.102 -0.099 -0.101 -10.30 -0.73 178 98 1387.10 1389.33 1390.42 20.16 1.98 5.357 5.300 5.331 5.360 5.357 -0.115 -0.108 -0.112 -10.06 -1.07 180 100 1407.13 1409.47 1410.50 20.04 2.59 5.464 5.394 5.433 5.453 5.372 0.326 0.328 0.327 -10.03 -0.91 182 102 1426.81 1429.27 1429.97 19.68 3.62 5.492 5.408 5.455 5.467 5.386 0.323 0.325 0.323 -9.71 -1.39 184 104 1445.91 1448.21 1448.88 19.10 4.67 5.518 5.420 5.476 5.479 5.396 0.315 0.317 0.316 -9.35 -1.86 186 106 1464.08 1466.25 1467.22 18.16 5.66 5.539 5.426 5.491 5.485 5.402 0.301 0.304 0.302 -8.80 -2.34 188 108 1480.98 1483.51 1485.02 16.90 6.59 5.565 5.437 5.511 5.496 5.409 0.291 0.295 0.293 -8.26 -2.81 190 110 1498.25 1500.58 1502.33 17.28 8.61 5.532 5.376 5.467 5.435 5.416 -0.150 -0.133 -0.143 -8.63 -3.90 192 112 1515.15 1517.40 1519.12 16.90 10.38 5.558 5.387 5.488 5.446 5.423 -0.148 -0.131 -0.140 -8.38 -3.90 194 114 1531.54 1533.67 1535.43 16.39 11.36 5.583 5.398 5.508 5.457 5.431 -0.144 -0.127 -0.137 -8.10 -4.81 196 116 1547.37 1549.40 1551.22 15.82 12.49 5.607 5.408 5.526 5.466 5.439 -0.136 -0.121 -0.130 -7.81 -5.30 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 198 118 1562.63 1564.66 1566.49 15.26 13.74 5.629 5.416 5.544 5.475 5.446 -0.121 -0.109 -0.116 -7.58 -5.75 200 120 1577.54 1579.56 1581.18 14.91 14.93 5.650 5.424 5.561 5.483 5.455 -0.101 -0.093 -0.098 -7.46 -6.35 202 122 1592.31 1594.13 1595.16 14.77 16.02 5.673 5.433 5.579 5.491 5.465 -0.080 -0.077 -0.079 -7.37 -7.14 204 124 1606.93 1608.27 1608.65 14.62 17.00 5.696 5.441 5.598 5.500 5.474 -0.066 -0.066 -0.066 -6.87 -7.87 206 126 1621.70 1621.70 1621.05 14.76 18.01 5.720 5.445 5.615 5.503 5.484 0.000 0.000 0.000 -5.63 -8.59 208 128 1628.84 1628.84 1629.51 7.14 18.77 5.755 5.465 5.645 5.524 0.000 0.000 0.000 -3.63 -8.98 210 130 1635.88 1635.88 7.04 19.53 5.789 5.486 5.675 5.544 0.000 0.000 0.000 -3.59 -9.36 212 132 1642.82 1642.82 6.94 20.05 5.822 5.506 5.705 5.564 0.000 0.000 0.000 -3.55 -9.73 214 134 1649.80 1651.53 6.98 20.15 5.857 5.529 5.737 5.586 -0.054 -0.052 -0.054 -3.59 -9.88 216 136 1656.81 1658.51 7.01 20.33 5.895 5.549 5.769 5.606 0.097 0.075 0.089 -3.62 -9.94 218 138 1663.82 1665.56 7.01 20.70 5.930 5.569 5.800 5.626 0.118 0.091 0.108 -3.55 -10.10 220 140 1671.08 1672.86 7.26 20.99 5.999 5.631 5.868 5.688 0.232 0.218 0.227 -3.96 -10.17 222 142 1678.98 1680.78 7.90 21.49 6.042 5.664 5.909 5.720 0.266 0.254 0.262 -3.96 -10.40 224 144 1686.80 1688.58 7.82 22.07 6.082 5.694 5.947 5.750 0.293 0.284 0.290 -3.82 -10.68 226 146 1694.14 1696.01 7.35 22.71 6.113 5.714 5.975 5.770 0.298 0.290 0.295 -3.63 -10.98 228 148 1701.22 1703.10 7.07 23.35 6.143 5.735 6.003 5.790 0.302 0.296 0.300 -3.49 -11.28 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 230 150 1707.95 1709.79 6.74 23.95 6.174 5.756 6.032 5.812 0.310 0.305 0.308 -3.24 -11.57 232 152 1714.09 1716.00 6.14 24.47 6.206 5.773 6.060 5.828 0.311 0.306 0.309 -3.02 -11.84 234 154 1719.93 1721.92 5.84 25.03 6.236 5.789 6.087 5.844 0.310 0.307 0.309 -2.89 -12.12 236 156 1725.51 1727.56 5.58 25.69 6.264 5.806 6.113 5.861 0.306 0.304 0.306 -2.76 -12.44 238 158 1730.86 1732.86 5.35 26.44 6.288 5.821 6.135 5.876 0.297 0.296 0.296 -2.65 -12.80 240 160 1735.95 1737.78 5.09 27.20 6.312 5.835 6.157 5.890 0.286 0.287 0.286 -2.41 -13.16 242 162 1740.37 1742.42 4.42 27.77 6.338 5.846 6.180 5.900 0.274 0.278 0.275 -2.17 -13.46 244 164 1744.54 1746.75 4.18 28.29 6.364 5.855 6.202 5.909 0.261 0.268 0.263 -2.10 -13.74 246 166 1748.78 1750.53 4.24 28.93 6.365 5.807 6.189 5.862 -0.191 -0.174 -0.185 -2.26 -14.42 248 168 1753.16 1754.93 4.38 29.81 6.388 5.813 6.208 5.868 -0.174 -0.158 -0.169 -2.23 -14.67 250 170 1757.50 1759.20 4.34 30.49 6.411 5.821 6.228 5.876 -0.158 -0.145 -0.154 -2.18 -14.89 252 172 1761.70 1763.28 4.20 31.04 6.433 5.830 6.248 5.884 -0.145 -0.133 -0.141 -2.07 -15.14 254 174 1765.61 1767.18 3.91 31.68 6.453 5.837 6.266 5.892 -0.129 -0.118 -0.125 -1.96 -15.42 256 176 1769.42 1771.05 3.82 32.30 6.472 5.841 6.282 5.896 -0.103 -0.096 -0.101 -2.01 -15.67 258 178 1773.43 1774.91 4.00 33.03 6.492 5.846 6.299 5.901 -0.075 -0.071 -0.074 -2.11 -16.08 260 180 1777.79 1777.79 4.36 34.14 6.514 5.848 6.316 5.902 0.000 0.000 0.000 -2.38 -16.71 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 262 182 1782.52 1782.52 4.73 34.70 6.538 5.860 6.338 5.914 0.000 0.000 0.000 -2.34 -16.98 264 184 1787.20 1787.20 4.68 35.26 6.561 5.873 6.360 5.927 0.000 0.000 0.000 -1.02 -17.25 266 186 1786.38 1786.38 -0.82 35.57 6.595 5.884 6.389 5.938 0.000 0.000 0.000 0.36 -17.41 σ 3.12 1.20 0.052 Z = 82 (Pb) 174 92 1324.91 1324.91 22.62 -0.22 5.265 5.278 5.271 5.338 0.000 0.000 0.000 -11.28 1.80 176 94 1346.97 1346.97 22.07 0.67 5.295 5.291 5.293 5.351 0.000 0.000 0.000 -10.99 -0.54 178 96 1368.46 1368.46 1368.97 21.49 1.52 5.324 5.303 5.314 5.363 0.000 0.000 0.000 -10.71 -1.02 180 98 1389.37 1389.37 1390.63 20.91 2.28 5.352 5.314 5.335 5.374 0.000 0.000 0.000 -10.42 -0.14 182 100 1409.74 1409.74 1411.65 20.37 2.61 5.380 5.324 5.355 5.384 5.379 0.000 0.000 0.000 -10.13 -0.70 184 102 1429.49 1429.49 1432.02 19.75 2.68 5.407 5.335 5.375 5.395 5.393 0.000 0.000 0.000 -9.85 -0.95 186 104 1448.72 1450.77 1451.79 19.23 2.81 5.476 5.390 5.439 5.450 5.403 -0.194 -0.183 -0.189 -9.91 -1.09 188 106 1468.07 1470.08 1471.07 19.35 3.99 5.503 5.402 5.459 5.461 5.414 -0.194 -0.183 -0.189 -9.56 -1.61 190 108 1486.72 1488.73 1489.81 18.66 5.75 5.528 5.412 5.478 5.471 5.422 -0.189 -0.178 -0.185 -9.25 -2.09 192 110 1504.84 1506.81 1508.09 18.11 6.59 5.553 5.422 5.497 5.481 5.430 -0.182 -0.173 -0.178 -9.00 -2.53 194 112 1522.48 1524.37 1525.89 17.65 7.33 5.577 5.432 5.516 5.491 5.437 -0.175 -0.167 -0.171 -8.76 -2.96 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 196 114 1539.64 1541.43 1543.17 17.16 8.10 5.601 5.442 5.535 5.500 5.444 -0.168 -0.161 -0.165 -8.49 -3.38 198 116 1556.26 1557.95 1560.04 16.62 8.90 5.624 5.450 5.553 5.509 5.452 -0.160 -0.155 -0.158 -8.19 -3.82 200 118 1572.95 1572.95 1576.36 16.69 10.32 5.618 5.422 5.538 5.480 5.461 0.000 0.000 0.000 -8.47 -4.71 202 120 1589.67 1589.67 1592.19 16.72 12.13 5.642 5.432 5.558 5.490 5.471 0.000 0.000 0.000 -8.34 -5.27 204 122 1606.15 1606.15 1607.51 16.48 13.84 5.666 5.442 5.577 5.500 5.480 0.000 0.000 0.000 -8.19 -5.74 206 124 1622.34 1622.34 1622.32 16.19 15.41 5.690 5.451 5.596 5.509 5.490 0.000 0.000 0.000 -7.97 -6.24 208 126 1637.90 1637.90 1636.43 15.56 16.21 5.717 5.460 5.617 5.518 5.501 0.000 0.000 0.000 -6.32 -6.80 210 128 1645.81 1645.81 1645.55 7.91 16.97 5.751 5.480 5.647 5.538 5.521 0.000 0.000 0.000 -4.01 -6.84 212 130 1653.59 1653.59 1654.52 7.78 17.72 5.785 5.500 5.676 5.558 5.540 0.000 0.000 0.000 -3.96 -7.27 214 132 1661.27 1661.27 1663.29 7.68 18.45 5.817 5.520 5.705 5.577 5.558 0.000 0.000 0.000 -3.92 -7.85 216 134 1668.85 1668.85 7.58 19.05 5.850 5.539 5.734 5.597 0.000 0.000 0.000 -3.88 -8.13 218 136 1676.35 1676.35 7.49 19.54 5.881 5.558 5.762 5.616 0.000 0.000 0.000 -3.83 -8.52 220 138 1683.76 1683.76 7.41 19.94 5.912 5.577 5.790 5.634 0.000 0.000 0.000 -3.79 -8.91 222 140 1691.08 1691.08 7.33 20.00 5.943 5.595 5.817 5.652 0.000 0.000 0.000 -3.74 -9.24 224 142 1698.95 1700.75 7.87 19.97 6.033 5.678 5.906 5.734 0.252 0.234 0.246 -4.20 -9.66 226 144 1707.26 1709.05 8.31 20.47 6.073 5.707 5.943 5.763 0.280 0.265 0.275 -4.10 -9.90 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 228 146 1715.20 1717.03 7.93 21.05 6.104 5.728 5.971 5.783 0.286 0.273 0.282 -3.92 -10.18 230 148 1722.85 1724.70 7.65 21.63 6.134 5.748 5.999 5.804 0.292 0.281 0.288 -3.77 -10.46 232 150 1730.16 1731.94 7.31 22.21 6.166 5.771 6.029 5.826 0.302 0.293 0.299 -3.52 -10.75 234 152 1736.83 1738.74 6.67 22.74 6.196 5.787 6.056 5.842 0.302 0.294 0.299 -3.29 -11.02 236 154 1743.24 1745.27 6.41 23.31 6.226 5.804 6.083 5.859 0.301 0.294 0.299 -3.19 -11.30 238 156 1749.47 1751.55 6.23 23.96 6.254 5.820 6.108 5.875 0.297 0.290 0.294 -3.10 -11.62 240 158 1755.53 1757.53 6.06 24.67 6.278 5.834 6.130 5.889 0.287 0.281 0.285 -3.01 -11.96 242 160 1761.35 1763.13 5.82 25.40 6.302 5.849 6.152 5.903 0.277 0.273 0.276 -2.74 -12.30 244 162 1766.39 1768.46 5.04 26.02 6.327 5.861 6.174 5.915 0.266 0.265 0.265 -2.46 -12.62 246 164 1771.70 1773.37 5.31 27.16 6.330 5.816 6.163 5.871 -0.198 -0.178 -0.192 -2.73 -13.23 248 166 1776.86 1778.55 5.16 28.07 6.354 5.828 6.185 5.883 -0.190 -0.172 -0.184 -2.55 -13.54 250 168 1781.74 1783.47 4.89 28.59 6.377 5.838 6.206 5.893 -0.177 -0.162 -0.173 -2.46 -13.82 252 170 1786.51 1788.21 4.77 29.02 6.401 5.848 6.227 5.903 -0.164 -0.153 -0.160 -2.41 -14.06 254 172 1791.17 1792.78 4.65 29.47 6.424 5.858 6.247 5.912 -0.151 -0.142 -0.148 -2.32 -14.29 256 174 1795.60 1797.12 4.43 29.99 6.446 5.868 6.266 5.922 -0.139 -0.132 -0.137 -2.19 -14.55 258 176 1799.79 1801.35 4.19 30.37 6.465 5.874 6.283 5.928 -0.118 -0.113 -0.116 -2.17 -14.75 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 260 178 1805.01 1805.01 5.21 31.58 6.473 5.844 6.281 5.898 0.000 0.000 0.000 -2.68 -15.11 262 180 1810.31 1810.31 5.30 32.51 6.497 5.855 6.303 5.910 0.000 0.000 0.000 -2.65 -15.39 264 182 1815.56 1815.56 5.25 33.04 6.521 5.867 6.325 5.921 0.000 0.000 0.000 -2.61 -15.67 266 184 1820.77 1820.77 5.21 33.56 6.543 5.879 6.346 5.933 0.000 0.000 0.000 -1.23 -15.96 268 186 1820.28 1820.28 -0.49 33.90 6.576 5.891 6.374 5.945 0.000 0.000 0.000 0.19 -16.13 σ 2.47 1.68 0.035 Z = 84 (Po) 186 102 1428.55 1431.06 1431.45 -0.94 5.510 5.467 5.491 5.526 0.324 0.330 0.327 -10.59 0.29 188 104 1449.42 1451.75 1452.24 20.87 0.70 5.533 5.475 5.507 5.533 0.312 0.314 0.313 -10.25 -0.15 190 106 1469.50 1471.68 1472.40 20.08 1.43 5.522 5.445 5.488 5.504 -0.214 -0.209 -0.212 -10.04 -0.31 192 108 1489.07 1491.26 1492.04 19.57 2.34 5.546 5.454 5.506 5.512 5.522 -0.206 -0.201 -0.204 -9.68 -0.72 194 110 1508.06 1510.23 1511.12 19.00 3.23 5.569 5.462 5.523 5.520 5.517 -0.194 -0.189 -0.192 -9.45 -1.10 196 112 1526.66 1528.74 1529.73 18.59 4.18 5.592 5.471 5.541 5.529 5.514 -0.182 -0.179 -0.181 -9.23 -1.51 198 114 1544.79 1546.77 1547.88 18.13 5.15 5.615 5.480 5.558 5.538 5.515 -0.173 -0.170 -0.172 -8.97 -1.96 200 116 1562.36 1564.24 1565.49 17.57 6.10 5.637 5.488 5.575 5.546 5.520 -0.165 -0.163 -0.164 -8.66 -2.43 202 118 1579.37 1580.77 1582.63 17.01 6.42 5.633 5.461 5.563 5.520 5.528 -0.080 -0.070 -0.076 -8.79 -3.05 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 204 120 1596.72 1598.15 1599.17 17.35 7.05 5.655 5.469 5.579 5.528 5.538 -0.056 -0.050 -0.053 -8.69 -3.34 206 122 1613.95 1613.95 1615.16 17.23 7.80 5.676 5.477 5.596 5.535 5.548 0.000 0.000 0.000 -8.64 -3.59 208 124 1631.01 1631.01 1630.59 17.06 8.67 5.699 5.486 5.614 5.544 5.558 0.000 0.000 0.000 -8.37 -4.01 210 126 1647.24 1647.24 1645.21 16.24 9.34 5.726 5.495 5.635 5.553 5.570 0.000 0.000 0.000 -6.75 -4.34 212 128 1656.16 1656.16 1655.77 8.92 10.35 5.760 5.516 5.664 5.574 0.000 0.000 0.000 -4.51 -4.86 214 130 1664.93 1664.93 1666.01 8.77 11.34 5.793 5.537 5.694 5.594 0.000 0.000 0.000 -4.45 -5.37 216 132 1673.70 1674.87 1675.91 8.77 12.43 5.834 5.562 5.730 5.619 5.636 0.093 0.082 0.089 -4.70 -6.48 218 134 1682.81 1684.07 1685.47 9.11 13.95 5.869 5.582 5.760 5.639 5.655 0.114 0.096 0.107 -4.53 -7.13 220 136 1691.56 1692.96 1694.71 8.75 15.21 5.902 5.602 5.789 5.658 0.127 0.105 0.118 -4.39 -7.68 222 138 1700.07 1701.67 1703.63 8.51 16.31 5.937 5.624 5.820 5.680 0.147 0.122 0.138 -4.31 -8.20 224 140 1708.64 1710.44 8.57 17.56 5.982 5.659 5.863 5.715 0.198 0.173 0.189 -4.42 -8.62 226 142 1717.45 1719.25 8.81 18.50 6.024 5.690 5.902 5.746 0.236 0.211 0.227 -4.44 -8.89 228 144 1726.21 1728.02 8.76 18.95 6.064 5.720 5.940 5.775 0.266 0.244 0.258 -4.36 -9.14 230 146 1734.69 1736.51 8.48 19.50 6.096 5.742 5.969 5.798 0.276 0.257 0.269 -4.20 -9.42 232 148 1742.89 1744.73 8.20 20.04 6.127 5.764 5.998 5.819 0.284 0.268 0.278 -4.06 -9.70 234 150 1750.79 1752.53 7.90 20.63 6.160 5.789 6.029 5.844 0.296 0.286 0.293 -3.80 -10.00 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 236 152 1757.99 1759.92 7.20 21.16 6.189 5.804 6.055 5.859 0.295 0.285 0.291 -3.56 -10.27 238 154 1764.96 1767.03 6.97 21.72 6.218 5.819 6.080 5.874 0.293 0.283 0.289 -3.49 -10.55 240 156 1771.80 1773.89 6.84 22.33 6.244 5.834 6.103 5.888 0.286 0.276 0.283 -3.42 -10.84 242 158 1778.53 1780.50 6.73 23.00 6.267 5.846 6.125 5.901 0.276 0.265 0.272 -3.34 -11.16 244 160 1785.04 1786.75 6.51 23.69 6.291 5.859 6.146 5.914 0.267 0.257 0.264 -3.07 -11.48 246 162 1790.71 1792.71 5.67 24.32 6.315 5.871 6.167 5.925 0.255 0.246 0.252 -2.77 -11.80 248 164 1796.94 1798.57 6.23 25.24 6.327 5.846 6.168 5.900 -0.200 -0.183 -0.194 -3.07 -11.93 250 166 1802.78 1804.38 5.84 25.92 6.350 5.858 6.189 5.912 -0.193 -0.177 -0.188 -2.86 -12.26 252 168 1808.26 1809.88 5.48 26.52 6.374 5.869 6.210 5.923 -0.181 -0.168 -0.177 -2.74 -12.56 254 170 1813.58 1815.19 5.32 27.07 6.397 5.879 6.230 5.933 -0.168 -0.159 -0.165 -2.67 -12.86 256 172 1818.76 1820.32 5.18 27.59 6.420 5.889 6.251 5.943 -0.155 -0.149 -0.153 -2.59 -13.16 258 174 1823.73 1825.23 4.97 28.14 6.441 5.898 6.269 5.952 -0.144 -0.139 -0.142 -2.46 -13.49 260 176 1828.45 1829.92 4.71 28.66 6.458 5.902 6.284 5.956 -0.124 -0.118 -0.122 -2.42 -13.88 262 178 1833.64 1834.92 5.19 28.64 6.467 5.882 6.285 5.937 -0.054 -0.044 -0.051 -2.86 -14.10 264 180 1839.40 1839.40 5.76 29.10 6.490 5.889 6.305 5.944 0.000 0.000 0.000 -2.95 -14.22 266 182 1845.27 1845.27 5.87 29.71 6.515 5.900 6.327 5.954 0.000 0.000 0.000 -2.91 -14.50 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 268 184 1851.08 1851.08 5.81 30.31 6.539 5.909 6.349 5.963 0.000 0.000 0.000 -1.49 -14.77 276 192 1851.03 1852.13 0.38 32.33 6.681 5.980 6.476 6.034 0.116 0.084 0.106 -0.35 -15.99 278 194 1851.65 1852.85 0.62 33.33 6.716 6.001 6.508 6.054 0.138 0.101 0.127 -0.36 -16.27 280 196 1852.28 1853.50 0.63 33.73 6.752 6.022 6.541 6.075 0.159 0.117 0.146 -0.35 -16.49 282 198 1852.85 1854.12 0.57 34.09 6.785 6.043 6.573 6.095 0.175 0.132 0.162 -0.31 -16.70 284 200 1853.34 1854.70 0.49 34.43 6.817 6.064 6.603 6.116 0.189 0.146 0.177 -0.28 -16.89 286 202 1853.81 1855.26 0.47 34.75 6.849 6.087 6.634 6.139 0.205 0.163 0.193 -0.28 -17.06 288 204 1854.33 1855.83 0.52 35.03 6.881 6.112 6.666 6.164 0.225 0.184 0.213 -0.31 -17.20 290 206 1854.91 1856.42 0.59 35.25 6.914 6.137 6.698 6.189 0.244 0.205 0.233 -0.33 -17.33 292 208 1855.54 1857.03 0.62 35.48 6.947 6.161 6.730 6.213 0.261 0.225 0.251 -0.34 -17.46 294 210 1856.14 1857.60 0.61 35.73 6.980 6.184 6.762 6.236 0.276 0.242 0.266 -0.31 -17.60 296 212 1856.65 1858.11 0.51 36.02 7.010 6.205 6.791 6.257 0.285 0.255 0.276 -0.24 -17.75 298 214 1857.01 1858.51 0.36 36.33 7.038 6.226 6.819 6.277 0.289 0.263 0.282 -0.17 -17.91 300 216 1857.25 1858.79 0.24 36.63 7.067 6.244 6.846 6.295 0.290 0.267 0.283 -0.12 -18.06 302 218 1857.43 1858.97 0.18 36.78 7.107 6.209 6.869 6.261 -0.237 -0.210 -0.230 -0.22 -18.04 304 220 1857.77 1859.30 0.34 37.15 7.133 6.221 6.893 6.273 -0.236 -0.208 -0.228 -0.18 -18.22 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 306 222 1858.02 1859.52 0.26 37.51 7.160 6.233 6.918 6.284 -0.234 -0.205 -0.226 -0.13 -18.39 308 224 1858.17 1859.61 0.15 37.87 7.186 6.245 6.942 6.296 -0.231 -0.203 -0.224 -0.07 -18.56 310 226 1858.17 1859.57 0.00 38.24 7.211 6.257 6.966 6.308 -0.227 -0.200 -0.220 0.02 -18.74 σ 2.62 1.21 0.016 Z = 86 (Rn) 192 106 1469.37 1471.81 20.27 -0.13 5.627 5.591 5.611 5.648 0.415 0.440 0.426 -10.01 -0.09 194 108 1489.71 1491.32 1492.83 20.33 0.64 5.538 5.459 5.504 5.518 0.175 0.155 0.166 -10.18 -0.39 196 110 1509.63 1511.16 1512.72 19.92 1.57 5.560 5.467 5.519 5.525 0.162 0.145 0.155 -9.89 -0.84 198 112 1529.02 1530.54 1532.07 19.39 2.36 5.582 5.475 5.536 5.533 0.149 0.135 0.143 -9.65 -1.28 200 114 1547.97 1549.52 1550.98 18.96 3.18 5.604 5.483 5.552 5.541 0.136 0.124 0.131 -9.44 -1.70 202 116 1566.55 1568.13 1569.40 18.57 4.19 5.626 5.491 5.569 5.549 5.552 0.122 0.111 0.117 -9.24 -2.09 204 118 1584.72 1586.27 1587.24 18.17 5.35 5.647 5.498 5.585 5.556 5.557 0.102 0.094 0.099 -9.04 -2.42 206 120 1602.68 1604.18 1604.54 17.96 5.96 5.668 5.506 5.601 5.563 5.564 -0.080 -0.074 -0.077 -9.03 -2.56 208 122 1620.56 1621.96 1621.21 17.88 6.61 5.689 5.513 5.617 5.571 5.573 -0.056 -0.053 -0.055 -8.93 -2.97 210 124 1638.24 1638.24 1637.30 17.68 7.23 5.710 5.520 5.633 5.578 5.581 -0.040 -0.038 -0.039 -8.60 -3.35 212 126 1655.12 1655.12 1652.50 16.88 7.88 5.735 5.528 5.652 5.586 5.592 0.000 0.000 0.000 -7.00 -3.63 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 214 128 1665.08 1665.08 1664.30 9.96 8.92 5.768 5.550 5.682 5.607 0.000 0.000 0.000 -5.02 -4.17 216 130 1674.96 1676.26 1675.87 9.88 10.03 5.804 5.575 5.714 5.632 0.059 0.063 0.060 -5.21 -4.82 218 132 1685.54 1686.80 1687.05 10.58 11.84 5.843 5.598 5.748 5.655 5.654 0.107 0.104 0.106 -5.30 -5.34 220 134 1695.86 1697.20 1697.80 10.33 13.06 5.878 5.618 5.778 5.675 5.673 0.130 0.120 0.126 -5.13 -5.87 222 136 1705.82 1707.24 1708.18 9.95 14.26 5.911 5.637 5.806 5.693 5.692 0.148 0.133 0.142 -4.96 -6.42 224 138 1715.48 1717.02 1718.25 9.66 15.41 5.944 5.656 5.835 5.712 0.167 0.147 0.160 -4.84 -6.96 226 140 1724.93 1726.63 1728.09 9.46 16.29 5.979 5.677 5.866 5.733 0.191 0.165 0.181 -4.75 -7.48 228 142 1734.30 1736.09 1737.74 9.36 16.84 6.020 5.706 5.903 5.762 0.227 0.200 0.217 -4.72 -7.94 230 144 1743.64 1745.43 9.34 17.43 6.062 5.741 5.944 5.796 0.264 0.243 0.256 -4.67 -8.35 232 146 1752.70 1754.52 9.06 18.01 6.093 5.762 5.973 5.818 0.272 0.254 0.265 -4.49 -8.67 234 148 1761.48 1763.33 8.78 18.58 6.123 5.784 6.001 5.839 0.280 0.264 0.274 -4.35 -8.98 236 150 1770.00 1771.69 8.52 19.20 6.156 5.809 6.032 5.864 0.294 0.284 0.290 -4.08 -9.30 238 152 1777.71 1779.65 7.72 19.72 6.183 5.821 6.055 5.876 0.289 0.278 0.285 -3.83 -9.56 240 154 1785.22 1787.29 7.51 20.26 6.210 5.834 6.078 5.889 0.284 0.271 0.279 -3.77 -9.83 242 156 1792.64 1794.70 7.42 20.83 6.233 5.845 6.098 5.900 0.273 0.259 0.268 -3.72 -10.12 244 158 1799.98 1801.90 7.35 21.45 6.257 5.856 6.119 5.911 0.264 0.247 0.258 -3.66 -10.41 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 246 160 1807.11 1808.76 7.13 22.07 6.281 5.869 6.140 5.923 0.256 0.240 0.250 -3.39 -10.70 248 162 1813.44 1815.34 6.33 22.73 6.303 5.878 6.159 5.932 0.241 0.225 0.235 -3.09 -11.03 250 164 1819.51 1821.29 6.07 22.57 6.324 5.876 6.173 5.930 -0.203 -0.189 -0.198 -3.36 -10.87 252 166 1825.97 1827.69 6.46 23.19 6.347 5.887 6.194 5.941 -0.196 -0.182 -0.191 -3.16 -11.16 254 168 1832.05 1833.79 6.07 23.78 6.369 5.896 6.213 5.950 -0.183 -0.170 -0.178 -3.03 -11.45 256 170 1837.96 1839.69 5.91 24.38 6.390 5.904 6.231 5.958 -0.166 -0.155 -0.162 -2.99 -11.75 258 172 1843.81 1845.46 5.85 25.05 6.410 5.910 6.248 5.964 -0.149 -0.138 -0.145 -2.96 -12.13 260 174 1849.59 1851.09 5.78 25.85 6.428 5.912 6.262 5.965 -0.129 -0.116 -0.125 -2.94 -12.64 262 176 1855.35 1856.72 5.76 26.90 6.442 5.911 6.273 5.965 -0.102 -0.088 -0.097 -2.97 -13.15 264 178 1861.24 1862.55 5.89 27.60 6.462 5.915 6.289 5.969 -0.074 -0.063 -0.070 -3.03 -13.44 266 180 1867.29 1867.29 6.05 27.89 6.484 5.922 6.308 5.976 -0.048 -0.041 -0.046 -3.08 -13.66 268 182 1873.55 1873.55 6.26 28.28 6.509 5.929 6.328 5.982 0.000 0.000 0.000 -3.16 -13.84 270 184 1879.83 1879.83 6.28 28.75 6.535 5.936 6.350 5.990 0.000 0.000 0.000 -1.75 -14.06 272 186 1880.13 1880.13 0.29 29.17 6.565 5.952 6.378 6.006 0.000 0.000 0.000 -0.20 -14.28 274 188 1880.40 1880.40 0.28 29.60 6.595 5.969 6.405 6.022 0.000 0.000 0.000 -0.20 -14.51 276 190 1880.82 1881.87 0.42 30.17 6.638 5.990 6.443 6.044 0.094 0.078 0.089 -0.64 -14.77 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 278 192 1882.08 1883.19 1.26 31.05 6.672 6.011 6.474 6.064 0.120 0.098 0.113 -0.65 -15.03 280 194 1883.28 1884.47 1.20 31.63 6.705 6.029 6.505 6.081 0.140 0.111 0.131 -0.63 -15.30 282 196 1884.42 1885.63 1.13 32.14 6.738 6.046 6.535 6.098 0.158 0.123 0.147 -0.58 -15.55 284 198 1885.42 1886.69 1.01 32.57 6.770 6.063 6.564 6.116 0.172 0.132 0.160 -0.52 -15.79 286 200 1886.30 1887.65 0.88 32.96 6.800 6.082 6.592 6.134 0.184 0.142 0.172 -0.47 -16.01 288 202 1887.12 1888.55 0.82 33.31 6.831 6.102 6.622 6.154 0.198 0.154 0.185 -0.46 -16.23 290 204 1887.94 1889.43 0.82 33.62 6.862 6.126 6.652 6.178 0.215 0.171 0.202 -0.47 -16.43 292 206 1888.82 1890.33 0.88 33.91 6.895 6.151 6.684 6.203 0.235 0.193 0.223 -0.49 -16.62 294 208 1889.74 1891.24 0.92 34.21 6.928 6.176 6.717 6.228 0.254 0.214 0.242 -0.49 -16.80 296 210 1890.65 1892.11 0.91 34.51 6.960 6.199 6.748 6.251 0.268 0.232 0.258 -0.46 -16.98 298 212 1891.48 1892.93 0.82 34.83 6.990 6.221 6.777 6.272 0.278 0.245 0.268 -0.40 -17.15 300 214 1892.16 1893.63 0.69 35.15 7.018 6.240 6.804 6.291 0.282 0.253 0.274 -0.33 -17.32 302 216 1892.71 1894.19 0.55 35.46 7.045 6.258 6.830 6.309 0.283 0.255 0.275 -0.27 -17.47 304 218 1893.14 1894.67 0.43 35.71 7.073 6.273 6.856 6.324 0.282 0.256 0.275 -0.22 -17.61 306 220 1893.48 1895.04 0.34 35.71 7.101 6.286 6.882 6.337 0.281 0.257 0.274 -0.18 -17.74 308 222 1893.96 1895.50 0.48 35.94 7.141 6.266 6.908 6.316 -0.236 -0.213 -0.230 -0.29 -17.64 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 310 224 1894.44 1895.92 0.48 36.26 7.167 6.277 6.931 6.328 -0.233 -0.209 -0.227 -0.23 -17.79 312 226 1894.77 1896.20 0.33 36.60 7.192 6.288 6.955 6.339 -0.230 -0.205 -0.223 -0.15 -17.95 314 228 1894.93 1896.37 0.16 36.92 7.216 6.299 6.977 6.350 -0.223 -0.199 -0.216 -0.08 -18.09 316 230 1895.00 1896.46 0.07 37.23 7.239 6.310 6.998 6.360 -0.214 -0.192 -0.208 -0.05 -18.23 318 232 1895.02 1896.47 0.03 37.54 7.262 6.320 7.020 6.371 -0.205 -0.184 -0.200 -0.03 -18.37 320 234 1894.99 1896.38 -0.04 37.87 7.286 6.331 7.042 6.381 -0.196 -0.177 -0.191 0.02 -18.52 σ 2.43 1.26 0.003 Z = 88 (Ra) 198 110 1510.15 1512.08 0.52 5.578 5.505 5.546 5.563 0.181 0.166 0.174 -10.33 0.20 200 112 1530.49 1532.30 20.34 1.47 5.599 5.512 5.561 5.570 0.164 0.150 0.158 -10.11 -0.18 202 114 1550.39 1552.06 1552.48 19.89 2.41 5.620 5.519 5.576 5.577 0.149 0.138 0.144 -9.89 -0.60 204 116 1569.85 1571.43 1571.64 19.46 3.30 5.641 5.527 5.592 5.584 0.134 0.126 0.131 -9.66 -1.07 206 118 1588.81 1590.32 1590.28 18.97 4.09 5.661 5.534 5.607 5.591 0.118 0.111 0.115 -9.35 -1.55 208 120 1607.20 1608.70 1608.26 18.39 4.52 5.680 5.539 5.621 5.597 5.585 0.085 0.084 0.085 -9.24 -1.90 210 122 1625.59 1625.59 1625.69 18.39 5.03 5.698 5.545 5.635 5.602 5.592 0.048 0.049 0.049 -9.27 -2.24 212 124 1644.04 1644.04 1642.47 18.44 5.80 5.718 5.551 5.649 5.608 5.599 0.000 0.000 0.000 -9.22 -2.61 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 214 126 1661.57 1661.57 1658.32 17.53 6.45 5.744 5.560 5.669 5.617 5.608 0.000 0.000 0.000 -7.42 -2.92 216 128 1672.66 1672.66 1671.27 11.09 7.58 5.777 5.582 5.699 5.639 0.000 0.000 0.000 -5.57 -3.48 218 130 1683.71 1685.02 1684.06 11.05 8.75 5.812 5.608 5.730 5.664 0.057 0.063 0.059 -5.73 -3.99 220 132 1695.11 1696.49 1696.57 11.40 9.58 5.847 5.631 5.762 5.687 5.668 0.092 0.095 0.093 -5.69 -4.39 222 134 1706.25 1707.76 1708.67 11.14 10.39 5.882 5.650 5.791 5.706 5.700 0.124 0.120 0.122 -5.59 -4.74 224 136 1717.18 1718.89 1720.30 10.93 11.36 5.917 5.669 5.821 5.725 5.720 0.154 0.145 0.151 -5.48 -5.25 226 138 1728.00 1729.80 1731.60 10.82 12.52 5.954 5.692 5.854 5.748 5.739 0.191 0.179 0.187 -5.48 -5.93 228 140 1738.86 1740.56 1742.47 10.86 13.93 5.993 5.719 5.888 5.774 5.757 0.225 0.211 0.220 -5.40 -6.66 230 142 1749.35 1751.18 1753.04 10.49 15.06 6.029 5.744 5.922 5.799 5.779 0.250 0.234 0.244 -5.21 -7.20 232 144 1759.59 1761.34 1763.20 10.24 15.95 6.068 5.773 5.958 5.828 5.797 0.277 0.265 0.273 -5.02 -7.64 234 146 1769.25 1771.12 1772.91 9.66 16.55 6.095 5.789 5.982 5.844 0.278 0.265 0.273 -4.80 -7.96 236 148 1778.66 1780.56 9.41 17.18 6.123 5.809 6.008 5.863 0.283 0.271 0.279 -4.68 -8.29 238 150 1787.83 1789.50 9.17 17.83 6.154 5.831 6.037 5.886 0.294 0.286 0.291 -4.37 -8.62 240 152 1796.06 1798.00 8.23 18.34 6.180 5.842 6.058 5.896 0.287 0.277 0.283 -4.09 -8.87 242 154 1804.08 1806.15 8.03 18.86 6.204 5.851 6.078 5.906 0.278 0.265 0.273 -4.04 -9.13 244 156 1812.05 1814.08 7.97 19.41 6.226 5.860 6.096 5.914 0.265 0.249 0.259 -4.01 -9.39 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 246 158 1819.95 1821.83 7.90 19.97 6.249 5.870 6.116 5.924 0.256 0.237 0.249 -3.94 -9.66 248 160 1827.64 1829.28 7.69 20.54 6.272 5.881 6.136 5.935 0.248 0.228 0.241 -3.69 -9.93 250 162 1834.63 1836.45 6.98 21.19 6.291 5.887 6.152 5.941 0.228 0.205 0.220 -3.45 -10.24 252 164 1841.45 1843.15 6.82 21.94 6.302 5.884 6.159 5.938 0.189 0.163 0.180 -3.54 -10.66 254 166 1848.39 1849.99 6.94 22.42 6.322 5.891 6.176 5.945 0.169 0.147 0.161 -3.50 -11.04 256 168 1855.22 1856.76 6.83 23.18 6.345 5.901 6.196 5.955 0.155 0.136 0.149 -3.43 -11.40 258 170 1861.92 1863.41 6.69 23.96 6.368 5.911 6.216 5.965 0.143 0.127 0.137 -3.35 -11.75 260 172 1868.46 1869.94 6.55 24.66 6.392 5.921 6.236 5.975 0.130 0.116 0.125 -3.27 -12.09 262 174 1874.83 1876.25 6.37 25.24 6.414 5.930 6.256 5.984 0.115 0.103 0.111 -3.15 -12.41 264 176 1880.98 1882.31 6.15 25.62 6.435 5.936 6.273 5.989 0.090 0.083 0.088 -3.14 -12.61 266 178 1887.36 1888.61 6.39 26.12 6.457 5.943 6.291 5.996 -0.075 -0.062 -0.071 -3.31 -12.69 268 180 1893.93 1893.93 6.57 26.64 6.479 5.950 6.311 6.003 -0.051 -0.043 -0.049 -3.32 -12.98 270 182 1900.56 1900.56 6.63 27.02 6.504 5.956 6.330 6.009 0.000 0.000 0.000 -3.37 -13.21 272 184 1907.23 1907.23 6.66 27.39 6.531 5.962 6.352 6.015 0.000 0.000 0.000 -2.04 -13.38 274 186 1907.99 1907.99 0.77 27.87 6.560 5.980 6.379 6.033 0.000 0.000 0.000 -0.44 -13.64 276 188 1908.75 1908.75 0.76 28.35 6.589 5.998 6.406 6.051 0.000 0.000 0.000 -0.45 -13.90 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 278 190 1909.52 1909.52 0.76 28.69 6.617 6.016 6.433 6.069 0.000 0.000 0.000 -0.45 -14.15 280 192 1911.17 1912.30 1.65 29.09 6.662 6.038 6.473 6.091 0.113 0.095 0.108 -0.87 -14.13 282 194 1912.82 1914.02 1.65 29.53 6.694 6.057 6.502 6.109 0.134 0.110 0.127 -0.85 -14.32 284 196 1914.39 1915.65 1.57 29.97 6.727 6.073 6.531 6.126 0.152 0.123 0.143 -0.81 -14.53 286 198 1915.87 1917.20 1.48 30.45 6.758 6.090 6.560 6.142 0.167 0.133 0.157 -0.77 -14.75 288 200 1917.27 1918.65 1.40 30.97 6.788 6.107 6.588 6.160 0.181 0.143 0.169 -0.73 -15.00 290 202 1918.60 1920.04 1.33 31.48 6.818 6.127 6.616 6.179 0.196 0.156 0.184 -0.70 -15.28 292 204 1919.92 1921.41 1.32 31.98 6.849 6.151 6.646 6.203 0.218 0.179 0.206 -0.71 -15.60 294 206 1921.29 1922.79 1.37 32.47 6.882 6.177 6.679 6.229 0.240 0.203 0.229 -0.72 -15.90 296 208 1922.65 1924.13 1.35 32.91 6.914 6.201 6.710 6.252 0.256 0.222 0.246 -0.69 -16.15 298 210 1923.94 1925.40 1.29 33.28 6.946 6.221 6.740 6.273 0.268 0.236 0.259 -0.64 -16.35 300 212 1925.12 1926.58 1.18 33.64 6.975 6.241 6.768 6.292 0.277 0.247 0.268 -0.58 -16.54 302 214 1926.14 1927.58 1.02 33.98 7.002 6.259 6.794 6.310 0.280 0.252 0.272 -0.50 -16.72 304 216 1927.00 1928.44 0.86 34.29 7.027 6.276 6.818 6.326 0.280 0.253 0.272 -0.41 -16.88 306 218 1927.69 1929.19 0.70 34.56 7.054 6.290 6.843 6.340 0.279 0.253 0.271 -0.35 -17.02 308 220 1928.29 1929.84 0.60 34.81 7.081 6.302 6.868 6.353 0.277 0.252 0.270 -0.30 -17.14 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 310 222 1928.80 1930.34 0.51 34.84 7.108 6.314 6.892 6.364 0.274 0.250 0.267 -0.26 -17.27 312 224 1929.35 1930.88 0.55 34.91 7.151 6.310 6.924 6.360 -0.237 -0.219 -0.232 -0.38 -17.18 314 226 1929.99 1931.45 0.64 35.21 7.175 6.320 6.946 6.370 -0.233 -0.214 -0.228 -0.30 -17.33 316 228 1930.44 1931.88 0.45 35.50 7.199 6.331 6.968 6.381 -0.227 -0.208 -0.222 -0.21 -17.48 318 230 1930.75 1932.21 0.31 35.75 7.221 6.341 6.988 6.391 -0.219 -0.199 -0.213 -0.17 -17.60 320 232 1931.01 1932.48 0.26 35.99 7.243 6.350 7.009 6.400 -0.209 -0.190 -0.203 -0.16 -17.71 322 234 1931.25 1932.67 0.23 36.26 7.266 6.358 7.030 6.408 -0.199 -0.180 -0.194 -0.13 -17.83 324 236 1931.41 1932.76 0.16 36.56 7.288 6.367 7.050 6.417 -0.188 -0.171 -0.184 -0.08 -17.98 326 238 1931.43 1932.74 0.02 36.90 7.309 6.376 7.069 6.426 -0.177 -0.160 -0.172 0.00 -18.15 338 250 1931.57 1932.80 0.36 39.80 7.432 6.389 7.175 6.439 0.046 0.070 0.052 -0.23 -19.65 340 252 1931.97 1931.97 0.39 40.27 7.451 6.402 7.194 6.452 0.037 0.060 0.043 -0.19 -19.87 342 254 1932.28 1932.28 0.31 40.80 7.463 6.417 7.208 6.467 0.000 0.000 0.000 -0.24 -20.17 344 256 1932.75 1932.75 0.47 41.37 7.480 6.434 7.227 6.484 0.000 0.000 0.000 -0.21 -20.44 346 258 1933.18 1933.18 0.43 41.93 7.496 6.452 7.245 6.501 0.000 0.000 0.000 -0.99 -20.71 348 260 1930.67 1930.67 -2.51 41.96 7.567 6.450 7.300 6.499 0.000 0.000 0.000 1.30 -20.72 σ 2.54 1.46 0.015 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) Z = 90 (Th) 204 114 1550.32 1552.36 -0.06 5.632 5.553 5.598 5.611 0.158 0.151 0.155 -10.29 0.41 206 116 1570.76 1572.77 20.44 0.91 5.653 5.560 5.612 5.617 0.136 0.128 0.132 -10.18 -0.01 208 118 1590.88 1592.62 1591.73 20.12 2.06 5.674 5.567 5.628 5.624 0.122 0.113 0.118 -9.78 -0.47 210 120 1610.04 1611.65 1610.51 19.16 2.84 5.691 5.571 5.640 5.628 0.086 0.083 0.085 -9.62 -0.83 212 122 1629.22 1629.22 1628.60 19.19 3.63 5.709 5.576 5.653 5.633 0.040 0.040 0.040 -9.71 -1.43 214 124 1648.46 1648.46 1646.16 19.24 4.42 5.728 5.582 5.667 5.639 0.000 0.000 0.000 -9.52 -1.87 216 126 1666.60 1666.60 1662.69 18.14 5.04 5.753 5.591 5.686 5.648 0.000 0.000 0.000 -7.92 -2.18 218 128 1678.83 1678.83 1676.77 12.23 6.18 5.786 5.613 5.715 5.670 0.000 0.000 0.000 -6.13 -2.75 220 130 1690.87 1690.87 1690.59 12.03 7.16 5.818 5.636 5.744 5.692 0.017 0.019 0.018 -6.06 -3.30 222 132 1703.01 1704.39 1704.22 12.14 7.89 5.852 5.660 5.775 5.716 0.066 0.068 0.067 -6.08 -3.59 224 134 1714.87 1716.37 1717.57 11.86 8.62 5.884 5.681 5.803 5.737 0.080 0.081 0.081 -5.88 -4.00 226 136 1726.89 1728.70 1730.51 12.02 9.71 5.928 5.706 5.841 5.762 0.184 0.186 0.184 -6.21 -4.63 228 138 1739.40 1741.22 1743.08 12.51 11.40 5.969 5.736 5.878 5.792 5.749 0.226 0.228 0.227 -6.20 -5.44 230 140 1751.52 1753.27 1755.13 12.12 12.66 6.002 5.756 5.907 5.811 5.767 0.243 0.242 0.243 -5.95 -5.98 232 142 1763.06 1764.91 1766.69 11.54 13.71 6.036 5.778 5.938 5.833 5.785 0.265 0.261 0.263 -5.68 -6.51 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 234 144 1774.13 1775.89 1777.66 11.07 14.54 6.073 5.801 5.970 5.856 0.286 0.280 0.284 -5.35 -6.92 236 146 1784.41 1786.34 1788.16 10.28 15.16 6.098 5.817 5.992 5.872 0.284 0.278 0.282 -5.13 -7.26 238 148 1794.50 1796.42 10.08 15.84 6.125 5.836 6.017 5.890 0.288 0.283 0.286 -5.01 -7.61 240 150 1804.31 1805.96 9.81 16.48 6.154 5.854 6.043 5.908 0.295 0.292 0.294 -4.65 -7.93 242 152 1813.04 1815.01 8.74 16.99 6.179 5.864 6.064 5.919 0.289 0.282 0.286 -4.35 -8.19 244 154 1821.57 1823.64 8.53 17.49 6.202 5.874 6.083 5.928 0.280 0.271 0.276 -4.29 -8.44 246 156 1830.03 1832.06 8.46 17.98 6.224 5.882 6.101 5.936 0.268 0.256 0.263 -4.26 -8.68 248 158 1838.44 1840.31 8.41 18.48 6.247 5.891 6.120 5.945 0.258 0.243 0.252 -4.19 -8.93 250 160 1846.65 1848.29 8.21 19.01 6.269 5.901 6.139 5.955 0.248 0.232 0.242 -3.97 -9.18 252 162 1854.20 1856.04 7.55 19.57 6.288 5.907 6.154 5.961 0.227 0.207 0.220 -3.73 -9.44 254 164 1861.63 1863.44 7.42 20.18 6.302 5.909 6.165 5.963 0.192 0.168 0.183 -3.83 -9.65 256 166 1869.24 1870.99 7.61 20.85 6.321 5.917 6.182 5.971 0.167 0.142 0.158 -3.86 -9.90 258 168 1876.86 1878.57 7.62 21.63 6.342 5.926 6.200 5.980 0.149 0.126 0.141 -3.83 -10.19 260 170 1884.41 1886.08 7.55 22.49 6.365 5.936 6.220 5.990 0.136 0.115 0.128 -3.77 -10.51 262 172 1891.81 1893.42 7.40 23.35 6.388 5.947 6.240 6.000 0.126 0.107 0.119 -3.67 -10.85 264 174 1898.96 1900.42 7.15 24.13 6.413 5.957 6.261 6.010 0.117 0.101 0.111 -3.42 -11.16 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 266 176 1905.49 1906.83 6.52 24.51 6.433 5.962 6.278 6.016 0.093 0.084 0.090 -3.30 -11.44 268 178 1912.05 1913.22 6.57 24.69 6.452 5.968 6.294 6.022 0.061 0.057 0.060 -3.49 -11.93 270 180 1919.20 1919.20 7.14 25.27 6.475 5.975 6.312 6.028 -0.038 -0.029 -0.035 -3.59 -12.31 272 182 1926.33 1926.33 7.13 25.76 6.500 5.981 6.333 6.034 0.000 0.000 0.000 -3.55 -12.55 274 184 1933.32 1933.32 6.99 26.09 6.527 5.987 6.354 6.040 0.000 0.000 0.000 -2.26 -12.70 276 186 1934.61 1934.61 1.30 26.62 6.555 6.007 6.382 6.060 0.000 0.000 0.000 -0.71 -12.99 278 188 1935.91 1935.91 1.30 27.16 6.583 6.026 6.408 6.079 0.000 0.000 0.000 -0.71 -13.28 280 190 1937.21 1937.21 1.30 27.69 6.611 6.046 6.435 6.099 0.000 0.000 0.000 -0.72 -13.56 282 192 1938.67 1939.89 1.46 27.50 6.649 6.066 6.469 6.118 0.089 0.074 0.084 -0.99 -13.46 284 194 1940.62 1941.85 1.95 27.80 6.683 6.083 6.499 6.135 0.120 0.097 0.113 -1.02 -13.54 286 196 1942.55 1943.86 1.93 28.16 6.716 6.100 6.528 6.152 0.142 0.116 0.134 -1.00 -13.71 288 198 1944.45 1945.86 1.90 28.58 6.748 6.117 6.557 6.169 0.164 0.136 0.155 -1.00 -13.93 290 200 1946.38 1947.85 1.93 29.11 6.780 6.138 6.587 6.190 0.189 0.162 0.181 -1.03 -14.24 292 202 1948.45 1949.91 2.07 29.85 6.813 6.166 6.620 6.218 0.219 0.196 0.212 -1.08 -14.69 294 204 1950.52 1951.99 2.07 30.60 6.843 6.189 6.650 6.241 0.237 0.214 0.230 -1.04 -15.03 296 206 1952.49 1953.95 1.97 31.19 6.874 6.211 6.679 6.262 0.251 0.229 0.244 -0.98 -15.32 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 298 208 1954.31 1955.77 1.82 31.66 6.905 6.230 6.708 6.281 0.263 0.240 0.256 -0.90 -15.55 300 210 1956.00 1957.49 1.69 32.07 6.935 6.248 6.736 6.299 0.273 0.250 0.266 -0.84 -15.75 302 212 1957.57 1959.04 1.56 32.45 6.964 6.266 6.764 6.317 0.281 0.259 0.274 -0.76 -15.95 304 214 1958.94 1960.38 1.37 32.80 6.990 6.282 6.788 6.333 0.283 0.261 0.276 -0.66 -16.13 306 216 1960.11 1961.54 1.18 33.12 7.013 6.298 6.811 6.348 0.281 0.259 0.275 -0.56 -16.29 308 218 1961.08 1962.58 0.97 33.39 7.039 6.311 6.834 6.362 0.279 0.258 0.273 -0.48 -16.43 310 220 1961.92 1963.47 0.84 33.63 7.066 6.323 6.858 6.373 0.277 0.256 0.271 -0.43 -16.57 312 222 1962.68 1964.22 0.76 33.88 7.092 6.333 6.882 6.384 0.273 0.253 0.268 -0.39 -16.69 314 224 1963.37 1964.86 0.68 34.02 7.117 6.342 6.904 6.392 0.267 0.245 0.261 -0.35 -16.82 316 226 1964.01 1965.52 0.64 34.02 7.160 6.350 6.939 6.400 -0.236 -0.222 -0.232 -0.46 -16.74 318 228 1964.77 1966.22 0.76 34.33 7.183 6.361 6.960 6.411 -0.231 -0.217 -0.227 -0.35 -16.90 320 230 1965.33 1966.80 0.56 34.58 7.205 6.370 6.980 6.420 -0.223 -0.208 -0.219 -0.29 -17.04 322 232 1965.81 1967.30 0.48 34.80 7.226 6.378 7.000 6.428 -0.213 -0.198 -0.208 -0.27 -17.15 324 234 1966.27 1967.73 0.46 35.03 7.248 6.385 7.019 6.435 -0.201 -0.186 -0.197 -0.26 -17.27 326 236 1966.71 1968.08 0.43 35.30 7.268 6.391 7.037 6.441 -0.189 -0.171 -0.184 -0.23 -17.41 328 238 1967.06 1968.36 0.36 35.63 7.285 6.394 7.052 6.444 -0.174 -0.150 -0.167 -0.21 -17.60 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 330 240 1967.40 1968.71 0.34 36.07 7.300 6.390 7.063 6.440 -0.147 -0.116 -0.139 -0.27 -17.89 332 242 1967.89 1969.16 0.49 36.61 7.320 6.394 7.081 6.444 -0.127 -0.098 -0.119 -0.31 -18.15 334 244 1968.43 1969.62 0.54 37.16 7.340 6.401 7.100 6.451 -0.112 -0.086 -0.105 -0.31 -18.39 336 246 1968.96 1970.12 0.53 37.75 7.361 6.409 7.118 6.459 -0.096 -0.074 -0.090 -0.31 -18.66 338 248 1969.56 1970.74 0.60 38.35 7.381 6.416 7.137 6.466 0.067 0.074 0.069 -0.40 -18.87 340 250 1970.31 1971.49 0.75 38.74 7.406 6.421 7.159 6.471 0.047 0.059 0.050 -0.43 -19.09 342 252 1971.12 1971.12 0.81 39.16 7.426 6.430 7.177 6.479 0.000 0.000 0.000 -0.51 -19.46 344 254 1972.12 1972.12 1.00 39.84 7.445 6.443 7.197 6.493 0.000 0.000 0.000 -0.49 -19.68 346 256 1973.10 1973.10 0.97 40.35 7.464 6.458 7.216 6.507 0.000 0.000 0.000 -0.47 -19.92 348 258 1974.06 1974.06 0.96 40.87 7.482 6.473 7.235 6.522 0.000 0.000 0.000 -1.20 -20.16 350 260 1971.56 1971.56 -2.50 40.89 7.553 6.471 7.290 6.520 0.000 0.000 0.000 1.29 -20.17 σ 2.76 1.80 0.045 Z = 92 (U) 210 118 1590.71 1592.55 -0.17 5.684 5.599 5.647 5.656 0.132 0.129 0.131 -10.06 0.44 212 120 1610.28 1611.44 19.57 0.24 5.700 5.601 5.657 5.657 -0.098 -0.089 -0.094 -10.33 -0.16 214 122 1631.37 1631.37 21.09 2.15 5.720 5.607 5.672 5.664 0.000 0.000 0.000 -10.16 -0.41 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 216 124 1651.31 1651.31 1648.36 19.94 2.85 5.740 5.613 5.686 5.670 0.000 0.000 0.000 -9.76 -0.76 218 126 1670.02 1670.02 1665.68 18.71 3.42 5.764 5.622 5.705 5.679 0.000 0.000 0.000 -8.27 -1.08 220 128 1683.47 1683.47 13.44 4.63 5.796 5.644 5.733 5.701 0.000 0.000 0.000 -6.73 -1.63 222 130 1696.68 1696.68 1695.58 13.22 5.82 5.828 5.666 5.761 5.722 0.000 0.000 0.000 -6.63 -2.16 224 132 1709.70 1709.70 1710.26 13.02 6.69 5.858 5.688 5.789 5.744 0.000 0.000 0.000 -6.52 -2.69 226 134 1722.51 1722.51 1724.81 12.80 7.64 5.888 5.709 5.816 5.765 0.000 0.000 0.000 -6.41 -3.21 228 136 1735.92 1737.73 1739.06 13.41 9.03 5.949 5.754 5.872 5.810 0.232 0.251 0.240 -7.06 -4.12 230 138 1749.52 1751.39 1752.81 13.60 10.12 5.978 5.771 5.896 5.826 0.241 0.254 0.246 -6.73 -4.66 232 140 1762.69 1764.54 1765.96 13.17 11.17 6.009 5.788 5.922 5.843 0.255 0.264 0.258 -6.48 -5.18 234 142 1775.34 1777.15 1778.57 12.65 12.28 6.042 5.809 5.951 5.863 5.829 0.274 0.280 0.276 -6.16 -5.71 236 144 1787.18 1788.94 1790.41 11.84 13.05 6.075 5.827 5.980 5.882 5.843 0.289 0.290 0.290 -5.71 -6.10 238 146 1798.18 1800.10 1801.69 11.00 13.77 6.100 5.843 6.002 5.897 5.857 0.288 0.287 0.288 -5.50 -6.52 240 148 1809.00 1810.89 1812.42 10.82 14.50 6.127 5.861 6.027 5.915 0.292 0.292 0.292 -5.36 -6.91 242 150 1819.42 1821.07 10.42 15.11 6.154 5.876 6.050 5.930 0.296 0.296 0.296 -4.94 -7.22 244 152 1828.69 1830.66 9.27 15.65 6.179 5.888 6.071 5.942 0.291 0.290 0.291 -4.61 -7.49 246 154 1837.71 1839.78 9.02 16.14 6.203 5.898 6.090 5.952 0.284 0.281 0.283 -4.53 -7.75 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 248 156 1846.65 1848.68 8.94 16.62 6.225 5.908 6.109 5.961 0.274 0.268 0.272 -4.49 -8.00 250 158 1855.53 1857.40 8.87 17.09 6.247 5.917 6.128 5.970 0.264 0.256 0.261 -4.43 -8.24 252 160 1864.21 1865.89 8.68 17.56 6.269 5.925 6.145 5.978 0.253 0.242 0.249 -4.22 -8.49 254 162 1872.29 1874.16 8.08 18.09 6.288 5.933 6.162 5.987 0.234 0.220 0.229 -3.96 -8.74 256 164 1880.10 1881.99 7.82 18.48 6.304 5.937 6.174 5.990 0.203 0.186 0.197 -4.00 -8.91 258 166 1888.07 1889.88 7.97 18.83 6.321 5.944 6.190 5.998 0.177 0.160 0.171 -4.04 -9.06 260 168 1896.03 1897.82 7.96 19.18 6.342 5.953 6.207 6.006 0.158 0.142 0.152 -4.01 -9.22 262 170 1903.94 1905.71 7.90 19.53 6.363 5.961 6.225 6.015 0.142 0.127 0.136 -3.96 -9.41 264 172 1911.76 1913.44 7.82 19.95 6.385 5.970 6.244 6.024 0.127 0.113 0.122 -3.89 -9.62 266 174 1919.36 1920.85 7.61 20.40 6.409 5.979 6.264 6.033 0.116 0.102 0.111 -3.66 -9.85 268 176 1927.62 1927.62 8.25 22.13 6.421 5.985 6.275 6.038 0.000 0.000 0.000 -4.04 -10.63 270 178 1935.55 1935.55 7.93 23.49 6.446 5.992 6.295 6.046 0.000 0.000 0.000 -3.94 -10.85 272 180 1943.27 1943.27 7.72 24.07 6.471 5.999 6.315 6.052 0.000 0.000 0.000 -3.82 -11.04 274 182 1950.76 1950.76 7.49 24.44 6.497 6.005 6.336 6.058 0.000 0.000 0.000 -3.70 -11.21 276 184 1958.05 1958.05 7.28 24.73 6.524 6.011 6.357 6.064 0.000 0.000 0.000 -2.47 -11.38 278 186 1959.95 1959.95 1.90 25.34 6.552 6.032 6.384 6.085 0.000 0.000 0.000 -1.01 -11.68 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 280 188 1961.84 1961.84 1.89 25.93 6.579 6.053 6.411 6.106 0.000 0.000 0.000 -1.01 -11.98 282 190 1963.73 1963.73 1.88 26.52 6.607 6.074 6.438 6.127 0.000 0.000 0.000 -1.01 -12.28 284 192 1965.61 1965.61 1.88 26.94 6.634 6.095 6.464 6.147 0.000 0.000 0.000 -1.02 -12.57 286 194 1967.49 1967.49 1.88 26.87 6.660 6.115 6.490 6.167 0.000 0.000 0.000 -1.01 -12.86 288 196 1969.37 1969.37 1.88 26.82 6.687 6.135 6.516 6.187 0.000 0.000 0.000 -1.01 -13.13 290 198 1971.60 1973.07 2.22 27.15 6.742 6.147 6.559 6.199 0.174 0.157 0.169 -1.32 -13.32 292 200 1974.43 1975.82 2.84 28.05 6.779 6.179 6.596 6.231 0.217 0.209 0.215 -1.50 -13.81 294 202 1977.30 1978.75 2.87 28.85 6.810 6.201 6.625 6.252 0.235 0.227 0.233 -1.41 -14.15 296 204 1979.99 1981.48 2.69 29.47 6.838 6.221 6.652 6.272 0.247 0.239 0.245 -1.34 -14.45 298 206 1982.53 1983.94 2.54 30.04 6.866 6.241 6.679 6.292 0.258 0.249 0.255 -1.23 -14.72 300 208 1984.79 1986.26 2.26 30.48 6.896 6.257 6.707 6.308 0.268 0.256 0.264 -1.11 -14.94 302 210 1986.89 1988.41 2.10 30.89 6.926 6.274 6.734 6.325 0.277 0.264 0.273 -1.04 -15.15 304 212 1988.85 1990.32 1.96 31.29 6.955 6.292 6.761 6.342 0.285 0.272 0.281 -0.94 -15.35 306 214 1990.55 1992.00 1.70 31.62 6.979 6.306 6.784 6.356 0.285 0.271 0.281 -0.82 -15.52 308 216 1992.04 1993.49 1.49 31.93 7.002 6.321 6.805 6.371 0.283 0.268 0.278 -0.72 -15.69 310 218 1993.33 1994.82 1.28 32.24 7.027 6.335 6.829 6.385 0.282 0.267 0.277 -0.62 -15.86 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 312 220 1994.44 1995.97 1.11 32.51 7.053 6.346 6.852 6.396 0.279 0.265 0.275 -0.55 -16.00 314 222 1995.44 1996.98 1.01 32.76 7.079 6.355 6.875 6.405 0.275 0.260 0.270 -0.51 -16.13 316 224 1996.38 1997.90 0.94 33.01 7.103 6.363 6.896 6.414 0.267 0.251 0.262 -0.48 -16.26 318 226 1997.27 1998.76 0.89 33.26 7.123 6.372 6.914 6.422 0.255 0.235 0.249 -0.47 -16.40 320 228 1998.17 1999.61 0.90 33.40 7.142 6.382 6.932 6.432 0.242 0.219 0.236 -0.46 -16.56 322 230 1999.00 2000.40 0.83 33.67 7.163 6.393 6.952 6.443 0.232 0.207 0.225 -0.39 -16.70 324 232 1999.66 2001.12 0.66 33.85 7.185 6.399 6.971 6.449 0.219 0.195 0.212 -0.34 -16.79 326 234 2000.26 2001.78 0.60 33.99 7.208 6.405 6.991 6.455 0.205 0.183 0.198 -0.33 -16.87 328 236 2000.89 2002.28 0.63 34.19 7.245 6.409 7.021 6.459 -0.185 -0.162 -0.179 -0.41 -16.89 330 238 2001.68 2002.96 0.79 34.62 7.255 6.400 7.027 6.450 -0.153 -0.113 -0.142 -0.48 -17.11 332 240 2002.59 2003.87 0.91 35.19 7.274 6.407 7.044 6.456 -0.132 -0.090 -0.121 -0.52 -17.27 334 242 2003.59 2004.86 1.01 35.71 7.294 6.415 7.063 6.465 -0.114 -0.071 -0.102 -0.56 -17.42 336 244 2004.65 2005.85 1.06 36.22 7.316 6.425 7.083 6.475 -0.098 -0.060 -0.087 -0.58 -17.59 338 246 2005.73 2006.88 1.08 36.77 7.337 6.435 7.103 6.484 -0.081 -0.049 -0.072 -0.60 -17.75 340 248 2006.81 2006.81 1.08 37.25 7.359 6.440 7.122 6.489 0.000 0.000 0.000 -0.72 -17.95 342 250 2008.21 2008.21 1.40 37.90 7.382 6.450 7.143 6.499 0.000 0.000 0.000 -0.72 -18.09 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 344 252 2009.62 2009.62 1.41 38.50 7.404 6.460 7.164 6.509 0.000 0.000 0.000 -0.71 -18.29 346 254 2011.03 2011.03 1.41 38.91 7.426 6.471 7.185 6.520 0.000 0.000 0.000 -0.71 -18.44 348 256 2012.44 2012.44 1.41 39.34 7.448 6.482 7.205 6.531 0.000 0.000 0.000 -0.70 -18.63 350 258 2013.84 2013.84 1.41 39.79 7.469 6.493 7.225 6.542 0.000 0.000 0.000 -1.22 -18.80 352 260 2011.36 2011.36 -2.48 39.80 7.540 6.492 7.280 6.541 0.000 0.000 0.000 1.28 -18.81 σ 3.04 2.03 0.038 Z = 94 (Pu) 218 124 1651.44 1651.44 0.13 5.745 5.640 5.700 5.696 0.000 0.000 0.000 -10.18 0.31 220 126 1670.93 1670.93 19.49 0.91 5.769 5.648 5.717 5.704 0.000 0.000 0.000 -8.65 -0.07 222 128 1685.26 1685.26 14.33 1.80 5.801 5.670 5.746 5.726 0.000 0.000 0.000 -7.17 -0.53 224 130 1699.37 1699.37 14.11 2.69 5.832 5.692 5.773 5.748 0.000 0.000 0.000 -7.07 -0.99 226 132 1713.30 1713.30 13.92 3.60 5.863 5.714 5.802 5.770 0.036 0.037 0.036 -6.99 -1.52 228 134 1727.59 1729.23 1730.61 14.29 5.08 5.915 5.753 5.849 5.809 0.195 0.219 0.205 -7.79 -2.54 230 136 1743.12 1744.85 1745.93 15.53 7.20 5.953 5.780 5.883 5.835 0.231 0.254 0.241 -7.63 -3.04 232 138 1757.94 1759.62 1760.64 14.81 8.41 5.983 5.798 5.909 5.853 0.244 0.263 0.251 -7.27 -3.62 234 140 1772.11 1773.87 1774.80 14.18 9.43 6.013 5.816 5.934 5.870 0.258 0.273 0.264 -6.99 -4.14 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 236 142 1785.80 1787.50 1788.39 13.69 10.47 6.044 5.834 5.961 5.888 0.276 0.286 0.280 -6.62 -4.69 238 144 1798.42 1800.20 1801.27 12.62 11.24 6.076 5.851 5.988 5.905 5.854 0.288 0.293 0.290 -6.17 -5.15 240 146 1810.42 1812.28 1813.45 12.00 12.24 6.102 5.867 6.011 5.921 5.870 0.290 0.294 0.291 -5.94 -5.65 242 148 1822.05 1823.88 1825.00 11.63 13.05 6.129 5.884 6.035 5.938 5.882 0.295 0.298 0.296 -5.71 -6.10 244 150 1833.06 1834.72 1836.05 11.01 13.64 6.154 5.897 6.056 5.951 5.895 0.297 0.299 0.298 -5.23 -6.41 246 152 1842.91 1844.85 1846.61 9.85 14.21 6.179 5.910 6.078 5.964 0.293 0.295 0.294 -4.88 -6.72 248 154 1852.46 1854.51 9.56 14.75 6.203 5.922 6.098 5.976 0.288 0.289 0.288 -4.80 -7.01 250 156 1861.91 1863.92 9.44 15.25 6.226 5.933 6.117 5.986 0.279 0.279 0.279 -4.75 -7.29 252 158 1871.27 1873.15 9.36 15.74 6.248 5.942 6.136 5.996 0.270 0.268 0.269 -4.68 -7.56 254 160 1880.43 1882.17 9.16 16.22 6.269 5.950 6.153 6.003 0.257 0.253 0.256 -4.47 -7.82 256 162 1889.04 1890.93 8.61 16.75 6.289 5.959 6.170 6.012 0.242 0.234 0.239 -4.18 -8.09 258 164 1897.20 1899.14 8.16 17.10 6.306 5.964 6.183 6.017 0.215 0.205 0.211 -4.14 -8.26 260 166 1905.45 1907.30 8.25 17.38 6.322 5.971 6.198 6.024 0.188 0.178 0.184 -4.18 -8.41 262 168 1913.72 1915.56 8.27 17.69 6.342 5.978 6.214 6.031 0.167 0.158 0.164 -4.17 -8.56 264 170 1921.98 1923.80 8.26 18.04 6.362 5.986 6.230 6.039 0.148 0.138 0.144 -4.16 -8.74 266 172 1930.22 1931.91 8.24 18.46 6.383 5.994 6.248 6.047 0.130 0.120 0.126 -4.11 -8.95 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 268 174 1938.27 1939.77 8.05 18.90 6.407 6.002 6.268 6.055 0.118 0.106 0.114 -3.88 -9.16 270 176 1946.67 1946.67 8.40 19.05 6.418 6.008 6.278 6.061 0.040 0.031 0.037 -4.22 -9.23 272 178 1954.28 1954.28 7.61 18.73 6.439 6.017 6.296 6.069 0.000 0.000 0.000 -4.36 -9.44 274 180 1963.11 1963.11 8.83 19.83 6.466 6.021 6.317 6.074 -0.020 -0.015 -0.018 -4.01 -9.61 276 182 1970.98 1970.98 7.88 20.22 6.492 6.027 6.337 6.080 0.000 0.000 0.000 -3.90 -9.79 278 184 1978.65 1978.65 7.66 20.60 6.518 6.032 6.358 6.085 0.000 0.000 0.000 -2.72 -9.98 280 186 1981.13 1981.13 2.49 21.18 6.546 6.054 6.385 6.106 0.000 0.000 0.000 -1.29 -10.28 282 188 1983.59 1983.59 2.46 21.75 6.573 6.076 6.412 6.128 0.000 0.000 0.000 -1.29 -10.57 284 190 1986.04 1986.04 2.45 22.31 6.600 6.097 6.438 6.149 0.000 0.000 0.000 -1.29 -10.86 286 192 1988.56 1989.76 2.52 22.95 6.640 6.114 6.472 6.167 0.098 0.085 0.094 -1.57 -11.61 288 194 1991.56 1992.87 3.00 24.06 6.671 6.133 6.500 6.185 0.121 0.106 0.116 -1.53 -12.02 290 196 1994.50 1995.92 2.94 25.12 6.703 6.153 6.529 6.205 0.148 0.134 0.143 -1.54 -12.38 292 198 1997.71 1999.15 3.22 26.12 6.739 6.182 6.565 6.233 0.193 0.190 0.192 -1.78 -12.80 294 200 2001.42 2002.76 3.70 26.98 6.775 6.209 6.599 6.260 0.226 0.228 0.226 -1.85 -13.14 296 202 2004.92 2006.39 3.50 27.62 6.804 6.230 6.627 6.281 0.242 0.245 0.243 -1.71 -13.44 298 204 2008.20 2009.67 3.28 28.21 6.832 6.249 6.653 6.300 0.253 0.255 0.254 -1.62 -13.72 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 300 206 2011.28 2012.66 3.07 28.75 6.858 6.267 6.679 6.318 0.262 0.262 0.262 -1.47 -13.99 302 208 2013.99 2015.48 2.71 29.20 6.887 6.283 6.705 6.334 0.271 0.269 0.270 -1.33 -14.23 304 210 2016.52 2018.04 2.53 29.63 6.917 6.299 6.732 6.350 0.280 0.276 0.279 -1.26 -14.46 306 212 2018.89 2020.34 2.37 30.04 6.946 6.315 6.758 6.365 0.287 0.282 0.286 -1.13 -14.67 308 214 2020.93 2022.40 2.04 30.37 6.969 6.328 6.780 6.378 0.286 0.279 0.284 -0.99 -14.86 310 216 2022.77 2024.24 1.85 30.73 6.991 6.343 6.801 6.393 0.284 0.276 0.281 -0.91 -15.06 312 218 2024.42 2025.90 1.65 31.10 7.015 6.358 6.824 6.409 0.283 0.275 0.281 -0.78 -15.27 314 220 2025.81 2027.33 1.39 31.37 7.041 6.369 6.847 6.419 0.280 0.272 0.278 -0.68 -15.42 316 222 2027.07 2028.61 1.26 31.63 7.067 6.377 6.869 6.427 0.275 0.266 0.272 -0.64 -15.56 318 224 2028.27 2029.83 1.20 31.89 7.090 6.386 6.889 6.435 0.268 0.257 0.265 -0.62 -15.70 320 226 2029.45 2031.00 1.19 32.19 7.110 6.395 6.908 6.444 0.257 0.244 0.253 -0.62 -15.85 322 228 2030.66 2032.13 1.21 32.50 7.130 6.406 6.927 6.455 0.247 0.231 0.242 -0.61 -16.00 324 230 2031.79 2033.16 1.13 32.80 7.151 6.418 6.946 6.467 0.238 0.221 0.233 -0.51 -16.15 326 232 2032.64 2034.08 0.85 32.98 7.174 6.425 6.966 6.474 0.226 0.210 0.221 -0.42 -16.24 328 234 2033.39 2034.93 0.75 33.13 7.196 6.431 6.985 6.480 0.212 0.199 0.208 -0.40 -16.32 330 236 2034.14 2035.72 0.75 33.25 7.219 6.437 7.005 6.486 0.198 0.187 0.195 -0.40 -16.39 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 332 238 2035.21 2036.52 1.07 33.53 7.239 6.428 7.019 6.478 -0.161 -0.128 -0.152 -0.60 -16.47 334 240 2036.32 2037.60 1.11 33.73 7.259 6.437 7.037 6.487 -0.149 -0.115 -0.139 -0.59 -16.57 336 242 2037.43 2038.71 1.10 33.83 7.279 6.446 7.056 6.495 -0.134 -0.102 -0.125 -0.60 -16.64 338 244 2038.57 2039.83 1.15 33.92 7.300 6.454 7.075 6.504 -0.119 -0.089 -0.111 -0.63 -16.70 340 246 2039.78 2040.96 1.21 34.05 7.321 6.463 7.094 6.513 -0.104 -0.077 -0.097 -0.65 -16.77 342 248 2041.04 2042.14 1.26 34.23 7.341 6.473 7.113 6.522 -0.088 -0.064 -0.081 -0.68 -16.85 344 250 2042.38 2043.42 1.33 34.17 7.362 6.481 7.132 6.530 -0.065 -0.047 -0.060 -0.74 -16.90 346 252 2043.89 2043.89 1.52 34.28 7.384 6.486 7.151 6.535 0.000 0.000 0.000 -0.87 -16.91 348 254 2045.62 2045.62 1.72 34.59 7.408 6.495 7.172 6.544 0.000 0.000 0.000 -0.87 -17.05 350 256 2047.35 2047.35 1.73 34.91 7.431 6.503 7.194 6.552 0.000 0.000 0.000 -0.86 -17.20 352 258 2049.08 2049.08 1.73 35.24 7.454 6.512 7.215 6.561 0.000 0.000 0.000 -1.26 -17.35 354 260 2046.61 2046.61 -2.48 35.24 7.525 6.511 7.269 6.560 0.000 0.000 0.000 1.27 -17.36 σ 2.95 1.20 0.054 Z = 96 (Cm) 224 128 1685.41 1685.41 0.15 5.806 5.696 5.759 5.752 0.000 0.000 0.000 -7.63 0.19 226 130 1700.54 1700.54 15.13 1.17 5.838 5.720 5.788 5.775 -0.044 -0.051 -0.047 -7.59 -0.36 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 228 132 1715.80 1717.26 15.26 2.50 5.872 5.744 5.819 5.800 0.088 0.098 0.092 -7.54 -1.06 230 134 1731.67 1733.40 15.86 4.08 5.919 5.778 5.861 5.833 0.188 0.212 0.198 -8.17 -1.66 232 136 1747.97 1749.87 16.31 4.85 5.957 5.806 5.895 5.861 0.229 0.252 0.239 -8.10 -2.04 234 138 1763.89 1765.69 1766.86 15.91 5.95 5.988 5.827 5.922 5.881 0.246 0.269 0.255 -7.80 -2.51 236 140 1779.18 1781.09 1781.87 15.29 7.07 6.019 5.846 5.949 5.900 0.265 0.286 0.274 -7.56 -2.98 238 142 1794.11 1795.75 1796.42 14.93 8.30 6.049 5.864 5.975 5.918 0.283 0.302 0.290 -7.17 -3.44 240 144 1807.71 1809.50 1810.29 13.60 9.29 6.080 5.880 6.001 5.935 0.294 0.308 0.299 -6.68 -3.93 242 146 1820.76 1822.61 1823.35 13.05 10.34 6.107 5.896 6.024 5.950 5.829 0.299 0.310 0.304 -6.44 -4.44 244 148 1833.39 1835.08 1835.84 12.63 11.34 6.132 5.912 6.046 5.965 5.843 0.302 0.310 0.305 -6.10 -4.96 246 150 1844.93 1846.62 1847.82 11.54 11.88 6.156 5.921 6.065 5.975 5.856 0.299 0.307 0.302 -5.55 -5.36 248 152 1855.45 1857.38 1859.19 10.51 12.54 6.180 5.934 6.086 5.988 5.869 0.296 0.303 0.299 -5.21 -5.77 250 154 1865.63 1867.66 1869.73 10.18 13.16 6.204 5.946 6.106 5.999 0.291 0.296 0.293 -5.11 -6.15 252 156 1875.68 1877.69 10.05 13.78 6.227 5.957 6.126 6.010 0.283 0.287 0.284 -5.05 -6.51 254 158 1885.64 1887.53 9.96 14.37 6.250 5.967 6.144 6.020 0.274 0.276 0.275 -4.96 -6.85 256 160 1895.32 1897.14 9.68 14.89 6.270 5.974 6.161 6.027 0.261 0.262 0.262 -4.75 -7.15 258 162 1904.53 1906.42 9.21 15.49 6.291 5.984 6.178 6.037 0.248 0.246 0.247 -4.42 -7.46 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 260 164 1913.02 1915.01 8.50 15.82 6.308 5.990 6.192 6.043 0.224 0.222 0.223 -4.28 -7.64 262 166 1921.56 1923.47 8.53 16.11 6.324 5.996 6.206 6.049 0.197 0.195 0.197 -4.33 -7.78 264 168 1930.13 1932.03 8.57 16.41 6.342 6.003 6.221 6.056 0.175 0.174 0.175 -4.33 -7.94 266 170 1938.73 1940.60 8.60 16.75 6.361 6.010 6.236 6.063 0.153 0.150 0.152 -4.34 -8.11 268 172 1947.71 1949.22 8.98 17.50 6.380 6.019 6.253 6.072 -0.136 -0.124 -0.132 -4.46 -8.45 270 174 1956.48 1957.94 8.76 18.21 6.400 6.026 6.270 6.079 -0.118 -0.107 -0.114 -4.39 -8.62 272 176 1965.16 1966.47 8.69 18.49 6.421 6.033 6.287 6.086 -0.102 -0.091 -0.098 -4.35 -8.79 274 178 1973.74 1974.64 8.57 19.46 6.444 6.040 6.305 6.093 -0.096 -0.084 -0.092 -4.07 -9.00 276 180 1981.70 1982.69 7.97 18.60 6.464 6.044 6.321 6.096 -0.055 -0.048 -0.053 -4.08 -9.03 278 182 1989.79 1989.79 8.09 18.80 6.487 6.048 6.339 6.101 0.000 0.000 0.000 -4.09 -9.14 280 184 1997.83 1997.83 8.04 19.18 6.513 6.053 6.359 6.105 0.000 0.000 0.000 -3.00 -9.33 282 186 2000.91 2000.91 3.08 19.78 6.541 6.075 6.386 6.127 0.000 0.000 0.000 -1.59 -9.63 284 188 2003.97 2003.97 3.06 20.38 6.568 6.097 6.413 6.149 0.000 0.000 0.000 -1.58 -9.93 286 190 2007.17 2008.15 3.20 21.13 6.609 6.119 6.449 6.171 0.094 0.096 0.095 -2.14 -10.59 288 192 2011.13 2012.41 3.96 22.57 6.638 6.140 6.476 6.192 0.113 0.111 0.112 -1.96 -10.99 290 194 2014.92 2016.29 3.79 23.36 6.668 6.160 6.504 6.211 0.133 0.129 0.131 -1.91 -11.38 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 292 196 2018.65 2020.08 3.73 24.15 6.700 6.182 6.534 6.233 0.159 0.157 0.159 -1.94 -11.80 294 198 2022.67 2024.08 4.02 24.95 6.734 6.209 6.567 6.260 0.195 0.199 0.197 -2.11 -12.14 296 200 2026.91 2028.27 4.24 25.49 6.768 6.232 6.599 6.283 0.222 0.228 0.224 -2.11 -12.38 298 202 2030.96 2032.44 4.05 26.04 6.797 6.253 6.626 6.304 0.240 0.246 0.242 -1.99 -12.63 300 204 2034.80 2036.27 3.84 26.60 6.824 6.272 6.652 6.323 0.251 0.257 0.253 -1.90 -12.91 302 206 2038.43 2039.83 3.63 27.15 6.850 6.290 6.677 6.341 0.260 0.266 0.262 -1.74 -13.19 304 208 2041.66 2043.18 3.23 27.67 6.879 6.307 6.703 6.358 0.271 0.275 0.272 -1.57 -13.45 306 210 2044.67 2046.19 3.01 28.15 6.908 6.323 6.730 6.373 0.280 0.282 0.281 -1.48 -13.69 308 212 2047.46 2048.93 2.79 28.57 6.936 6.336 6.755 6.387 0.287 0.286 0.287 -1.34 -13.90 310 214 2049.92 2051.43 2.46 28.99 6.959 6.350 6.776 6.400 0.286 0.283 0.285 -1.21 -14.15 312 216 2052.22 2053.72 2.30 29.45 6.981 6.365 6.797 6.415 0.283 0.280 0.282 -1.14 -14.40 314 218 2054.33 2055.75 2.11 29.91 7.005 6.380 6.820 6.430 0.284 0.280 0.283 -0.97 -14.65 316 220 2056.02 2057.52 1.69 30.21 7.030 6.390 6.842 6.440 0.280 0.276 0.279 -0.83 -14.82 318 222 2057.55 2059.12 1.53 30.48 7.055 6.398 6.864 6.448 0.275 0.270 0.274 -0.79 -14.98 320 224 2059.05 2060.66 1.50 30.78 7.078 6.408 6.884 6.457 0.268 0.263 0.267 -0.78 -15.14 322 226 2060.54 2062.14 1.50 31.09 7.100 6.418 6.903 6.467 0.260 0.253 0.257 -0.78 -15.30 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 324 228 2062.06 2063.57 1.52 31.40 7.120 6.429 6.922 6.479 0.251 0.242 0.248 -0.77 -15.46 326 230 2063.50 2064.84 1.44 31.71 7.141 6.441 6.942 6.491 0.243 0.234 0.240 -0.63 -15.61 328 232 2064.52 2065.98 1.02 31.88 7.163 6.448 6.961 6.498 0.231 0.223 0.228 -0.49 -15.71 330 234 2065.42 2067.00 0.91 32.03 7.185 6.455 6.981 6.504 0.218 0.212 0.216 -0.48 -15.79 332 236 2066.33 2067.97 0.91 32.20 7.207 6.461 7.000 6.511 0.204 0.200 0.203 -0.48 -15.87 334 238 2067.51 2068.87 1.17 32.30 7.226 6.455 7.013 6.504 -0.169 -0.144 -0.162 -0.72 -15.87 336 240 2068.86 2070.16 1.35 32.54 7.246 6.464 7.031 6.514 -0.159 -0.134 -0.152 -0.69 -15.99 338 242 2070.15 2071.43 1.29 32.72 7.265 6.474 7.049 6.523 -0.147 -0.122 -0.140 -0.68 -16.11 340 244 2071.44 2072.73 1.29 32.87 7.285 6.482 7.068 6.532 -0.132 -0.109 -0.126 -0.69 -16.20 342 246 2072.80 2074.03 1.35 33.01 7.305 6.491 7.086 6.540 -0.117 -0.096 -0.111 -0.73 -16.28 344 248 2074.23 2075.35 1.43 33.19 7.326 6.499 7.105 6.548 -0.102 -0.082 -0.096 -0.76 -16.37 346 250 2075.73 2076.74 1.50 33.35 7.346 6.508 7.123 6.557 -0.084 -0.067 -0.080 -0.79 -16.46 348 252 2077.32 2078.26 1.60 33.43 7.367 6.514 7.142 6.563 -0.059 -0.046 -0.055 -0.87 -16.53 350 254 2079.17 2079.17 1.84 33.55 7.390 6.518 7.161 6.567 0.000 0.000 0.000 -1.01 -16.56 352 256 2081.17 2081.17 2.00 33.82 7.415 6.524 7.183 6.573 0.000 0.000 0.000 -1.00 -16.69 354 258 2083.17 2083.17 2.00 34.09 7.440 6.530 7.205 6.579 0.000 0.000 0.000 -1.31 -16.81 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 356 260 2080.72 2080.72 -2.46 34.11 7.497 6.533 7.250 6.582 0.000 0.000 0.000 1.22 -16.85 σ 2.98 1.21 0.120 Z = 98 (Cf) 228 130 1700.73 1701.82 0.19 5.849 5.751 5.807 5.806 0.084 0.101 0.091 -8.48 0.14 230 132 1717.34 1719.01 16.61 1.53 5.885 5.775 5.839 5.830 0.129 0.148 0.137 -8.39 -0.47 232 134 1734.15 1735.96 16.81 2.48 5.923 5.802 5.872 5.856 0.176 0.198 0.185 -8.49 -0.91 234 136 1751.20 1753.10 17.05 3.23 5.963 5.832 5.908 5.886 0.227 0.249 0.236 -8.52 -1.26 236 138 1767.97 1769.74 16.78 4.09 5.992 5.850 5.933 5.904 0.241 0.263 0.250 -8.22 -1.65 238 140 1784.04 1785.97 16.07 4.86 6.022 5.867 5.959 5.921 0.259 0.278 0.267 -7.94 -2.03 240 142 1799.67 1801.40 1802.46 15.63 5.57 6.052 5.884 5.984 5.938 0.276 0.293 0.283 -7.55 -2.40 242 144 1814.14 1816.07 1817.20 14.47 6.43 6.082 5.901 6.009 5.955 0.287 0.301 0.292 -7.15 -2.84 244 146 1828.20 1830.20 1831.25 14.05 7.43 6.108 5.917 6.032 5.971 0.293 0.304 0.297 -6.97 -3.35 246 148 1841.91 1843.71 1844.78 13.72 8.52 6.134 5.933 6.055 5.987 0.298 0.308 0.302 -6.62 -3.87 248 150 1854.50 1856.25 1857.78 12.59 9.57 6.157 5.943 6.074 5.997 0.298 0.308 0.302 -6.05 -4.37 250 152 1865.99 1868.02 1869.99 11.48 10.54 6.182 5.956 6.094 6.010 0.296 0.305 0.300 -5.65 -4.87 252 154 1877.04 1879.13 1881.27 11.05 11.41 6.206 5.968 6.114 6.021 0.291 0.299 0.294 -5.52 -5.32 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 254 156 1887.89 1889.92 1892.10 10.86 12.21 6.228 5.979 6.133 6.033 0.283 0.289 0.285 -5.44 -5.75 256 158 1898.58 1900.49 10.69 12.95 6.252 5.990 6.153 6.043 0.276 0.281 0.278 -5.29 -6.14 258 160 1908.89 1910.79 10.30 13.57 6.272 5.998 6.169 6.051 0.264 0.269 0.266 -5.07 -6.47 260 162 1918.77 1920.66 9.88 14.25 6.292 6.008 6.187 6.061 0.253 0.256 0.255 -4.68 -6.83 262 164 1927.60 1929.64 8.83 14.58 6.310 6.015 6.202 6.068 0.232 0.237 0.234 -4.44 -7.00 264 166 1936.43 1938.40 8.83 14.87 6.326 6.021 6.215 6.074 0.206 0.211 0.208 -4.48 -7.16 266 168 1945.31 1947.28 8.88 15.18 6.343 6.028 6.229 6.080 0.184 0.188 0.185 -4.49 -7.32 268 170 1954.34 1956.01 9.03 15.61 6.362 6.033 6.244 6.086 -0.161 -0.152 -0.158 -4.86 -7.46 270 172 1963.85 1965.38 9.51 16.14 6.381 6.042 6.260 6.095 -0.149 -0.141 -0.146 -4.66 -7.72 272 174 1972.95 1974.47 9.11 16.48 6.400 6.049 6.276 6.102 -0.129 -0.122 -0.127 -4.56 -7.92 274 176 1981.99 1983.38 9.04 16.83 6.420 6.055 6.292 6.108 -0.112 -0.106 -0.110 -4.53 -8.11 276 178 1990.97 1991.98 8.97 17.23 6.442 6.062 6.309 6.114 -0.102 -0.095 -0.099 -4.18 -8.33 278 180 1999.05 2000.12 8.08 17.35 6.462 6.065 6.325 6.118 -0.064 -0.061 -0.063 -4.18 -8.42 280 182 2007.45 2007.45 8.40 17.66 6.485 6.069 6.343 6.122 -0.043 -0.040 -0.042 -4.01 -8.58 282 184 2015.73 2015.73 8.28 17.90 6.509 6.073 6.361 6.125 0.000 0.000 0.000 -3.23 -8.71 284 186 2019.43 2019.43 3.70 18.52 6.536 6.095 6.387 6.148 0.000 0.000 0.000 -1.89 -9.02 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 286 188 2023.09 2023.09 3.66 19.12 6.563 6.118 6.414 6.170 0.000 0.000 0.000 -1.88 -9.33 288 190 2027.64 2028.60 4.55 20.48 6.607 6.144 6.453 6.196 0.105 0.115 0.108 -2.61 -9.88 290 192 2032.36 2033.71 4.71 21.23 6.635 6.166 6.480 6.217 0.121 0.130 0.124 -2.35 -10.26 292 194 2036.95 2038.38 4.60 22.04 6.665 6.186 6.508 6.238 0.141 0.148 0.144 -2.32 -10.66 294 196 2041.55 2042.95 4.59 22.90 6.696 6.209 6.538 6.260 0.166 0.171 0.167 -2.34 -11.06 296 198 2046.21 2047.61 4.66 23.54 6.728 6.231 6.568 6.282 0.192 0.197 0.193 -2.37 -11.39 298 200 2050.89 2052.30 4.68 23.98 6.760 6.253 6.597 6.304 0.216 0.221 0.218 -2.34 -11.63 300 202 2055.45 2056.94 4.56 24.49 6.789 6.274 6.625 6.325 0.235 0.241 0.237 -2.26 -11.89 302 204 2059.84 2061.30 4.40 25.04 6.816 6.293 6.651 6.344 0.247 0.254 0.249 -2.17 -12.15 304 206 2064.01 2065.41 4.17 25.58 6.843 6.311 6.676 6.361 0.257 0.264 0.259 -2.01 -12.41 306 208 2067.79 2069.26 3.77 26.12 6.870 6.328 6.701 6.378 0.268 0.274 0.270 -1.82 -12.67 308 210 2071.23 2072.73 3.45 26.57 6.898 6.342 6.726 6.393 0.276 0.280 0.277 -1.69 -12.90 310 212 2074.46 2075.96 3.22 27.00 6.926 6.356 6.751 6.406 0.282 0.284 0.282 -1.58 -13.14 312 214 2077.45 2078.99 2.99 27.53 6.949 6.370 6.773 6.420 0.282 0.283 0.282 -1.49 -13.42 314 216 2080.30 2081.82 2.85 28.09 6.972 6.385 6.794 6.435 0.282 0.282 0.282 -1.41 -13.71 316 218 2082.98 2084.33 2.67 28.64 6.995 6.401 6.816 6.450 0.283 0.283 0.283 -1.19 -14.00 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 318 220 2085.00 2086.50 2.02 28.98 7.020 6.410 6.838 6.460 0.280 0.279 0.279 -0.99 -14.19 320 222 2086.87 2088.48 1.87 29.32 7.045 6.419 6.859 6.469 0.275 0.275 0.275 -0.96 -14.37 322 224 2088.71 2090.37 1.84 29.66 7.068 6.429 6.880 6.479 0.270 0.269 0.269 -0.95 -14.56 324 226 2090.54 2092.19 1.83 29.99 7.090 6.440 6.900 6.490 0.262 0.261 0.262 -0.94 -14.73 326 228 2092.37 2093.92 1.83 30.31 7.111 6.451 6.919 6.501 0.254 0.252 0.254 -0.93 -14.90 328 230 2094.13 2095.47 1.76 30.63 7.131 6.463 6.938 6.512 0.246 0.244 0.246 -0.76 -15.06 330 232 2095.33 2096.85 1.20 30.82 7.153 6.471 6.957 6.520 0.235 0.234 0.234 -0.58 -15.17 332 234 2096.42 2098.05 1.08 30.99 7.175 6.478 6.976 6.527 0.222 0.223 0.223 -0.56 -15.26 334 236 2097.49 2099.18 1.08 31.16 7.197 6.485 6.995 6.534 0.210 0.212 0.210 -0.56 -15.36 336 238 2098.59 2100.01 1.10 31.08 7.214 6.478 7.007 6.528 -0.174 -0.156 -0.169 -0.86 -15.25 338 240 2100.22 2101.56 1.63 31.36 7.233 6.488 7.025 6.537 -0.165 -0.147 -0.160 -0.83 -15.40 340 242 2101.77 2103.06 1.55 31.62 7.252 6.498 7.043 6.547 -0.155 -0.136 -0.150 -0.79 -15.54 342 244 2103.27 2104.56 1.50 31.83 7.271 6.508 7.061 6.557 -0.142 -0.124 -0.137 -0.78 -15.66 344 246 2104.80 2106.07 1.53 32.01 7.291 6.516 7.079 6.565 -0.126 -0.110 -0.121 -0.82 -15.77 346 248 2106.43 2107.59 1.62 32.20 7.311 6.523 7.097 6.572 -0.110 -0.095 -0.106 -0.86 -15.87 348 250 2108.14 2109.13 1.71 32.41 7.331 6.532 7.115 6.581 -0.095 -0.080 -0.091 -0.88 -15.99 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 350 252 2109.89 2110.78 1.75 32.56 7.352 6.538 7.134 6.587 -0.074 -0.061 -0.070 -0.92 -16.08 352 254 2111.78 2111.78 1.90 32.62 7.375 6.542 7.153 6.591 -0.044 -0.036 -0.042 -1.02 -16.13 354 256 2113.96 2113.96 2.18 32.79 7.400 6.544 7.174 6.593 0.000 0.000 0.000 -1.11 -16.19 356 258 2116.18 2116.18 2.22 33.01 7.427 6.548 7.196 6.597 0.000 0.000 0.000 -0.02 -16.30 358 260 2113.82 2113.82 -2.36 33.11 7.467 6.556 7.229 6.604 0.000 0.000 0.000 1.15 -16.38 σ 3.48 1.59 Z = 100 (Fm) 232 132 1717.40 1719.13 0.06 5.892 5.802 5.853 5.857 0.133 0.156 0.143 -8.90 0.32 234 134 1735.13 1736.96 17.73 0.99 5.928 5.826 5.884 5.880 0.170 0.191 0.179 -8.89 -0.14 236 136 1752.86 1754.71 17.73 1.67 5.964 5.851 5.917 5.906 0.212 0.233 0.221 -8.87 -0.49 238 138 1770.38 1772.11 17.51 2.40 5.995 5.871 5.943 5.925 0.234 0.254 0.242 -8.60 -0.83 240 140 1787.22 1789.13 16.84 3.17 6.025 5.889 5.969 5.943 0.254 0.272 0.261 -8.33 -1.22 242 142 1803.61 1805.36 16.39 3.93 6.054 5.905 5.993 5.959 0.270 0.287 0.277 -7.96 -1.62 244 144 1819.03 1820.97 15.42 4.88 6.083 5.922 6.017 5.975 0.279 0.293 0.285 -7.64 -2.11 246 146 1834.10 1836.10 1837.12 15.07 5.90 6.110 5.938 6.041 5.992 0.287 0.299 0.292 -7.48 -2.62 248 148 1848.87 1850.64 1851.55 14.77 6.95 6.137 5.955 6.064 6.008 0.295 0.306 0.299 -7.12 -3.13 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 250 150 1862.43 1864.23 1865.52 13.56 7.93 6.160 5.965 6.082 6.018 0.296 0.307 0.300 -6.56 -3.62 252 152 1874.97 1877.06 1878.92 12.54 8.99 6.184 5.978 6.103 6.031 0.295 0.306 0.299 -6.13 -4.15 254 154 1886.93 1889.05 1890.98 11.96 9.89 6.207 5.990 6.122 6.043 0.289 0.298 0.293 -5.95 -4.61 256 156 1898.65 1900.70 1902.54 11.73 10.76 6.230 6.001 6.142 6.055 0.282 0.290 0.285 -5.85 -5.04 258 158 1910.15 1912.08 11.49 11.56 6.254 6.013 6.162 6.066 0.277 0.284 0.280 -5.66 -5.44 260 160 1921.12 1923.11 10.97 12.23 6.274 6.021 6.178 6.074 0.267 0.275 0.270 -5.41 -5.79 262 162 1931.73 1933.64 10.61 12.95 6.294 6.032 6.195 6.084 0.257 0.265 0.260 -4.97 -6.16 264 164 1940.91 1943.00 9.19 13.31 6.313 6.040 6.211 6.093 0.240 0.249 0.244 -4.61 -6.35 266 166 1950.05 1952.10 9.14 13.62 6.329 6.046 6.224 6.099 0.215 0.226 0.219 -4.64 -6.51 268 168 1959.25 1961.28 9.19 13.94 6.345 6.052 6.237 6.104 0.191 0.201 0.195 -4.66 -6.69 270 170 1968.53 1970.50 9.29 14.20 6.361 6.056 6.250 6.108 0.164 0.171 0.167 -4.72 -6.88 272 172 1978.49 1980.04 9.95 14.64 6.381 6.064 6.266 6.117 -0.156 -0.151 -0.155 -4.89 -6.98 274 174 1988.00 1989.56 9.51 15.05 6.399 6.070 6.281 6.123 -0.135 -0.132 -0.134 -4.76 -7.21 276 176 1997.45 1998.91 9.45 15.46 6.419 6.077 6.297 6.129 -0.117 -0.115 -0.117 -4.74 -7.43 278 178 2006.86 2007.98 9.41 15.89 6.440 6.083 6.314 6.135 -0.106 -0.103 -0.105 -4.33 -7.66 280 180 2015.15 2016.31 8.29 16.10 6.459 6.086 6.329 6.138 -0.069 -0.069 -0.069 -4.31 -7.80 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 282 182 2023.87 2023.87 8.72 16.42 6.482 6.090 6.345 6.142 -0.045 -0.045 -0.045 -4.12 -7.98 284 184 2032.42 2032.42 8.55 16.69 6.505 6.092 6.363 6.145 0.000 0.000 0.000 -3.47 -8.12 286 186 2036.75 2036.75 4.33 17.31 6.532 6.115 6.389 6.168 0.000 0.000 0.000 -2.20 -8.43 288 188 2041.11 2041.11 4.36 18.02 6.561 6.141 6.418 6.193 -0.038 -0.051 -0.043 -2.29 -8.78 290 190 2046.57 2047.56 5.46 18.93 6.603 6.166 6.456 6.218 0.107 0.124 0.113 -2.96 -9.12 292 192 2052.05 2053.43 5.47 19.69 6.631 6.188 6.483 6.240 0.125 0.141 0.130 -2.73 -9.49 294 194 2057.41 2058.88 5.36 20.45 6.661 6.209 6.511 6.261 0.146 0.160 0.151 -2.70 -9.84 296 196 2062.77 2064.21 5.37 21.23 6.692 6.232 6.540 6.283 0.169 0.181 0.173 -2.71 -10.20 298 198 2068.14 2069.54 5.37 21.93 6.723 6.253 6.569 6.304 0.192 0.201 0.195 -2.68 -10.54 300 200 2073.37 2074.81 5.23 22.48 6.753 6.273 6.597 6.324 0.212 0.218 0.214 -2.60 -10.85 302 202 2078.44 2079.93 5.07 22.99 6.782 6.293 6.624 6.343 0.229 0.233 0.230 -2.52 -11.12 304 204 2083.35 2084.78 4.90 23.50 6.809 6.312 6.649 6.362 0.241 0.246 0.243 -2.42 -11.38 306 206 2088.01 2089.41 4.66 24.00 6.835 6.328 6.674 6.379 0.252 0.258 0.254 -2.27 -11.64 308 208 2092.31 2093.77 4.31 24.53 6.862 6.346 6.699 6.397 0.264 0.271 0.266 -2.07 -11.90 310 210 2096.22 2097.74 3.91 24.99 6.890 6.361 6.724 6.411 0.272 0.278 0.274 -1.93 -12.14 312 212 2099.94 2101.50 3.72 25.48 6.916 6.375 6.748 6.425 0.278 0.282 0.279 -1.85 -12.40 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 314 214 2103.53 2105.12 3.58 26.08 6.941 6.389 6.770 6.439 0.280 0.283 0.281 -1.79 -12.70 316 216 2107.00 2108.54 3.47 26.69 6.964 6.404 6.792 6.454 0.281 0.284 0.282 -1.72 -13.01 318 218 2110.30 2111.59 3.30 27.32 6.987 6.420 6.813 6.469 0.283 0.286 0.284 -1.44 -13.33 320 220 2112.70 2114.24 2.40 27.70 7.011 6.429 6.835 6.479 0.279 0.283 0.280 -1.19 -13.54 322 222 2114.96 2116.64 2.27 28.09 7.035 6.440 6.856 6.489 0.276 0.279 0.277 -1.16 -13.75 324 224 2117.19 2118.92 2.23 28.49 7.059 6.451 6.877 6.500 0.272 0.275 0.273 -1.14 -13.96 326 226 2119.40 2121.09 2.20 28.86 7.082 6.462 6.897 6.511 0.265 0.269 0.267 -1.12 -14.15 328 228 2121.58 2123.16 2.18 29.21 7.102 6.473 6.916 6.522 0.257 0.261 0.259 -1.09 -14.33 330 230 2123.66 2125.03 2.08 29.53 7.123 6.484 6.935 6.533 0.249 0.253 0.250 -0.90 -14.49 332 232 2125.09 2126.67 1.43 29.76 7.143 6.493 6.954 6.542 0.238 0.243 0.240 -0.69 -14.62 334 234 2126.36 2128.05 1.27 29.95 7.165 6.500 6.973 6.549 0.226 0.233 0.228 -0.66 -14.73 336 236 2127.62 2129.34 1.26 30.13 7.187 6.507 6.991 6.556 0.214 0.221 0.216 -0.65 -14.83 338 238 2128.86 2130.56 1.24 30.27 7.208 6.512 7.009 6.561 0.198 0.206 0.200 -0.66 -14.92 340 240 2130.36 2131.74 1.50 30.14 7.222 6.510 7.020 6.559 -0.169 -0.155 -0.165 -0.98 -14.79 342 242 2132.23 2133.54 1.86 30.45 7.240 6.520 7.037 6.569 -0.160 -0.145 -0.156 -0.94 -14.95 344 244 2134.01 2135.29 1.78 30.74 7.258 6.530 7.054 6.579 -0.148 -0.133 -0.144 -0.91 -15.11 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 346 246 2135.77 2137.04 1.76 30.97 7.277 6.538 7.072 6.587 -0.132 -0.119 -0.129 -0.92 -15.24 348 248 2137.60 2138.80 1.83 31.17 7.297 6.546 7.089 6.594 -0.116 -0.103 -0.112 -0.97 -15.36 350 250 2139.55 2140.55 1.94 31.41 7.318 6.553 7.108 6.602 -0.101 -0.088 -0.097 -1.00 -15.48 352 252 2141.51 2142.31 1.96 31.62 7.339 6.560 7.126 6.608 -0.084 -0.072 -0.081 -0.96 -15.60 354 254 2143.49 2144.26 1.98 31.71 7.362 6.562 7.145 6.610 -0.052 -0.045 -0.050 -1.09 -15.65 356 256 2145.76 2145.76 2.27 31.80 7.387 6.563 7.165 6.612 0.000 0.000 0.000 -1.22 -15.71 358 258 2148.17 2148.17 2.41 31.99 7.414 6.566 7.187 6.614 0.000 0.000 0.000 -0.16 -15.80 360 260 2146.00 2146.00 -2.17 32.18 7.444 6.577 7.214 6.626 0.000 0.000 0.000 1.05 -15.92 σ 3.49 1.53 Z = 102 (No) 238 136 1752.97 1754.77 17.33 0.11 5.967 5.872 5.926 5.926 0.200 0.219 0.208 -9.20 0.28 240 138 1771.16 1772.90 18.19 0.79 5.999 5.892 5.954 5.946 0.225 0.243 0.233 -8.97 -0.07 242 140 1788.76 1790.67 17.60 1.54 6.029 5.910 5.980 5.964 0.249 0.266 0.256 -8.72 -0.45 244 142 1805.94 1807.74 17.18 2.33 6.058 5.928 6.004 5.981 0.266 0.283 0.273 -8.41 -0.84 246 144 1822.37 1824.29 16.43 3.34 6.086 5.944 6.027 5.997 0.275 0.291 0.282 -8.15 -1.33 248 146 1838.46 1840.41 16.10 4.37 6.113 5.960 6.050 6.013 0.284 0.298 0.290 -7.99 -1.85 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 250 148 1854.21 1855.94 15.75 5.34 6.139 5.975 6.073 6.029 0.292 0.304 0.297 -7.64 -2.35 252 150 1868.87 1870.65 1871.30 14.66 6.44 6.162 5.986 6.092 6.039 0.293 0.305 0.298 -7.11 -2.89 254 152 1882.51 1884.54 1885.59 13.64 7.54 6.186 5.999 6.112 6.053 0.294 0.305 0.298 -6.62 -3.43 256 154 1895.38 1897.45 1898.63 12.87 8.45 6.209 6.012 6.131 6.065 0.288 0.299 0.292 -6.39 -3.88 258 156 1907.97 1909.98 12.59 9.31 6.233 6.024 6.151 6.077 0.282 0.292 0.286 -6.26 -4.29 260 158 1920.25 1922.19 12.28 10.10 6.257 6.036 6.171 6.089 0.278 0.288 0.282 -6.02 -4.69 262 160 1931.92 1933.95 11.68 10.81 6.277 6.045 6.188 6.098 0.269 0.280 0.274 -5.76 -5.04 264 162 1943.23 1945.16 11.30 11.50 6.296 6.055 6.204 6.107 0.260 0.272 0.265 -5.27 -5.42 266 164 1952.84 1954.94 9.61 11.93 6.317 6.064 6.222 6.117 0.247 0.261 0.252 -4.81 -5.62 268 166 1962.33 1964.43 9.49 12.28 6.333 6.071 6.234 6.123 0.224 0.239 0.230 -4.82 -5.81 270 168 1971.89 1973.97 9.56 12.65 6.347 6.075 6.246 6.128 0.197 0.211 0.202 -4.86 -6.01 272 170 1981.59 1983.59 9.70 13.06 6.362 6.078 6.257 6.130 0.168 0.177 0.171 -4.94 -6.25 274 172 1991.64 1993.20 10.04 13.15 6.381 6.085 6.272 6.137 -0.160 -0.157 -0.159 -5.15 -6.26 276 174 2001.63 2003.21 9.99 13.62 6.399 6.091 6.287 6.143 -0.138 -0.137 -0.138 -5.00 -6.51 278 176 2011.54 2013.04 9.92 14.09 6.418 6.097 6.302 6.149 -0.120 -0.119 -0.120 -4.98 -6.76 280 178 2021.42 2022.61 9.88 14.56 6.438 6.102 6.318 6.155 -0.108 -0.107 -0.108 -4.55 -7.00 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 282 180 2030.02 2031.25 8.60 14.87 6.457 6.106 6.332 6.158 -0.072 -0.074 -0.073 -4.47 -7.19 284 182 2039.09 2039.09 9.07 15.22 6.479 6.109 6.349 6.161 -0.047 -0.048 -0.047 -4.26 -7.38 286 184 2047.93 2047.93 8.84 15.51 6.501 6.112 6.365 6.164 0.000 0.000 0.000 -3.71 -7.54 288 186 2052.89 2052.89 4.96 16.14 6.528 6.135 6.392 6.187 0.000 0.000 0.000 -2.51 -7.86 290 188 2057.94 2059.08 5.05 16.83 6.559 6.163 6.422 6.214 0.051 0.068 0.057 -2.80 -8.21 292 190 2063.97 2065.09 6.03 17.40 6.597 6.186 6.456 6.237 0.103 0.123 0.110 -3.20 -8.45 294 192 2070.19 2071.53 6.22 18.14 6.627 6.208 6.485 6.259 0.126 0.145 0.132 -3.08 -8.76 296 194 2076.24 2077.70 6.05 18.83 6.657 6.229 6.513 6.281 0.148 0.166 0.154 -3.04 -9.07 298 196 2082.27 2083.72 6.03 19.49 6.687 6.251 6.541 6.302 0.170 0.186 0.176 -3.04 -9.38 300 198 2088.27 2089.69 6.00 20.13 6.717 6.272 6.569 6.323 0.192 0.205 0.196 -2.99 -9.68 302 200 2094.11 2095.58 5.84 20.73 6.747 6.292 6.597 6.342 0.210 0.219 0.213 -2.90 -9.99 304 202 2099.77 2101.28 5.67 21.33 6.776 6.311 6.623 6.361 0.225 0.232 0.227 -2.82 -10.31 306 204 2105.26 2106.69 5.49 21.92 6.802 6.329 6.649 6.380 0.237 0.243 0.239 -2.70 -10.63 308 206 2110.46 2111.86 5.19 22.45 6.828 6.346 6.672 6.396 0.248 0.253 0.249 -2.53 -10.93 310 208 2115.31 2116.73 4.85 22.99 6.855 6.364 6.697 6.414 0.260 0.267 0.262 -2.32 -11.21 312 210 2119.69 2121.23 4.38 23.47 6.882 6.379 6.721 6.429 0.267 0.274 0.269 -2.17 -11.46 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 314 212 2123.93 2125.55 4.24 23.99 6.908 6.393 6.745 6.443 0.273 0.280 0.275 -2.13 -11.72 316 214 2128.12 2129.76 4.19 24.60 6.933 6.408 6.768 6.458 0.278 0.284 0.280 -2.10 -12.00 318 216 2132.25 2133.81 4.12 25.25 6.956 6.424 6.790 6.473 0.281 0.287 0.283 -2.04 -12.31 320 218 2136.22 2137.51 3.97 25.92 6.979 6.438 6.811 6.487 0.282 0.289 0.285 -1.72 -12.63 322 220 2139.08 2140.68 2.86 26.38 7.003 6.449 6.833 6.498 0.280 0.287 0.282 -1.42 -12.87 324 222 2141.80 2143.52 2.72 26.83 7.027 6.460 6.854 6.510 0.277 0.285 0.279 -1.37 -13.10 326 224 2144.45 2146.20 2.65 27.25 7.051 6.471 6.875 6.521 0.273 0.281 0.276 -1.33 -13.32 328 226 2147.03 2148.74 2.58 27.63 7.074 6.482 6.895 6.531 0.268 0.276 0.270 -1.30 -13.52 330 228 2149.55 2151.16 2.52 27.97 7.094 6.493 6.914 6.542 0.259 0.268 0.262 -1.26 -13.69 332 230 2151.95 2153.37 2.40 28.29 7.114 6.503 6.932 6.552 0.251 0.259 0.253 -1.07 -13.86 334 232 2153.69 2155.31 1.74 28.60 7.134 6.514 6.951 6.563 0.241 0.250 0.244 -0.82 -14.03 336 234 2155.21 2156.92 1.52 28.85 7.156 6.521 6.969 6.570 0.229 0.240 0.232 -0.77 -14.16 338 236 2156.67 2158.41 1.46 29.05 7.178 6.527 6.988 6.576 0.217 0.228 0.220 -0.75 -14.27 340 238 2158.10 2159.82 1.43 29.23 7.198 6.532 7.004 6.580 0.200 0.211 0.203 -0.76 -14.37 342 240 2159.83 2161.28 1.74 29.47 7.203 6.537 7.011 6.586 0.163 0.164 0.164 -0.97 -14.51 344 242 2161.75 2163.13 1.91 29.52 7.224 6.543 7.029 6.592 0.148 0.148 0.148 -0.99 -14.61 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 346 244 2163.69 2165.03 1.95 29.68 7.244 6.551 7.047 6.599 0.134 0.132 0.134 -1.00 -14.73 348 246 2165.66 2166.89 1.97 29.89 7.265 6.559 7.066 6.608 0.121 0.116 0.119 -0.92 -14.86 350 248 2167.73 2168.94 2.07 30.13 7.284 6.566 7.083 6.614 -0.119 -0.108 -0.116 -1.09 -14.83 352 250 2169.92 2170.95 2.19 30.38 7.305 6.572 7.101 6.621 -0.103 -0.092 -0.100 -1.13 -14.96 354 252 2172.14 2172.86 2.22 30.63 7.327 6.579 7.120 6.627 -0.090 -0.079 -0.087 -1.03 -15.10 356 254 2174.21 2174.99 2.08 30.72 7.350 6.580 7.138 6.628 -0.056 -0.050 -0.055 -1.16 -15.16 358 256 2176.59 2176.59 2.38 30.83 7.375 6.583 7.158 6.631 -0.037 -0.032 -0.036 -1.11 -15.25 360 258 2179.16 2179.16 2.57 30.99 7.402 6.583 7.179 6.631 0.000 0.000 0.000 -0.32 -15.31 362 260 2177.25 2177.25 -1.92 31.25 7.427 6.597 7.203 6.645 0.000 0.000 0.000 0.92 -15.45 σ 2.94 0.99 Z = 104 (Rf) 244 140 1788.84 1790.72 0.08 6.034 5.932 5.991 5.986 0.242 0.258 0.249 -9.10 0.31 246 142 1806.77 1808.60 17.93 0.83 6.063 5.950 6.016 6.004 0.261 0.277 0.268 -8.83 -0.07 248 144 1824.12 1826.04 17.35 1.75 6.092 5.968 6.040 6.021 0.274 0.291 0.281 -8.62 -0.48 250 146 1841.21 1843.14 17.09 2.75 6.120 5.984 6.064 6.038 0.287 0.302 0.293 -8.49 -0.89 252 148 1857.95 1859.71 16.74 3.74 6.144 5.998 6.084 6.051 0.292 0.307 0.299 -8.17 -1.32 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 254 150 1873.85 1875.53 15.90 4.98 6.167 6.008 6.102 6.061 0.294 0.309 0.300 -7.69 -1.82 256 152 1888.61 1890.51 1890.67 14.76 6.10 6.191 6.021 6.123 6.074 0.295 0.309 0.301 -7.10 -2.37 258 154 1902.34 1904.29 1904.69 13.73 6.96 6.215 6.035 6.143 6.087 0.291 0.305 0.297 -6.80 -2.84 260 156 1915.73 1917.66 13.39 7.77 6.238 6.047 6.163 6.100 0.286 0.300 0.291 -6.66 -3.28 262 158 1928.80 1930.69 13.06 8.55 6.262 6.059 6.182 6.112 0.282 0.295 0.287 -6.40 -3.71 264 160 1941.20 1943.22 12.40 9.27 6.281 6.069 6.198 6.121 0.273 0.287 0.279 -6.12 -4.14 266 162 1953.26 1955.25 12.06 10.03 6.300 6.078 6.214 6.130 0.264 0.279 0.269 -5.59 -4.58 268 164 1963.31 1965.46 10.05 10.47 6.322 6.089 6.233 6.141 0.254 0.270 0.260 -5.03 -4.82 270 166 1973.19 1975.40 9.88 10.86 6.339 6.096 6.246 6.148 0.233 0.251 0.240 -5.01 -5.05 272 168 1983.17 1985.30 9.98 11.27 6.349 6.097 6.254 6.149 0.199 0.215 0.205 -5.11 -5.31 274 170 1993.38 1995.39 10.21 11.79 6.362 6.099 6.263 6.151 0.169 0.180 0.173 -5.19 -5.60 276 172 2003.70 2005.57 10.32 12.06 6.380 6.103 6.277 6.155 0.148 0.157 0.151 -5.16 -5.85 278 174 2013.91 2015.73 10.21 12.28 6.402 6.109 6.294 6.161 0.136 0.142 0.138 -4.86 -6.10 280 176 2024.29 2025.81 10.38 12.74 6.416 6.116 6.306 6.168 -0.120 -0.120 -0.120 -5.23 -6.09 282 178 2034.66 2035.90 10.37 13.24 6.437 6.121 6.322 6.173 -0.108 -0.108 -0.108 -4.77 -6.35 284 180 2043.66 2044.93 9.00 13.64 6.455 6.125 6.336 6.177 -0.073 -0.076 -0.074 -4.67 -6.57 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 286 182 2053.13 2053.13 9.48 14.04 6.476 6.128 6.352 6.180 -0.048 -0.050 -0.048 -4.43 -6.79 288 184 2062.29 2062.29 9.15 14.36 6.498 6.131 6.368 6.183 0.000 0.000 0.000 -3.96 -6.96 290 186 2067.89 2067.89 5.61 15.01 6.525 6.154 6.394 6.206 0.000 0.000 0.000 -2.83 -7.29 292 188 2073.66 2074.76 5.76 15.72 6.556 6.182 6.425 6.233 0.053 0.071 0.059 -3.14 -7.61 294 190 2080.14 2081.40 6.49 16.18 6.589 6.206 6.456 6.257 0.094 0.117 0.102 -3.36 -7.85 296 192 2086.93 2088.24 6.78 16.74 6.622 6.227 6.486 6.278 0.124 0.145 0.131 -3.38 -8.07 298 194 2093.56 2095.03 6.63 17.33 6.652 6.248 6.514 6.299 0.147 0.167 0.154 -3.33 -8.34 300 196 2100.18 2101.67 6.61 17.91 6.682 6.269 6.542 6.320 0.170 0.189 0.177 -3.33 -8.61 302 198 2106.78 2108.26 6.61 18.51 6.713 6.291 6.571 6.342 0.192 0.208 0.198 -3.30 -8.91 304 200 2113.25 2114.78 6.46 19.14 6.743 6.312 6.598 6.362 0.210 0.224 0.215 -3.22 -9.22 306 202 2119.57 2121.11 6.33 19.80 6.771 6.331 6.625 6.381 0.226 0.237 0.229 -3.15 -9.55 308 204 2125.73 2127.16 6.16 20.46 6.798 6.349 6.650 6.399 0.237 0.246 0.240 -3.02 -9.89 310 206 2131.56 2132.99 5.83 21.10 6.824 6.365 6.673 6.415 0.247 0.254 0.249 -2.84 -10.21 312 208 2137.02 2138.40 5.47 21.72 6.849 6.382 6.697 6.432 0.257 0.266 0.260 -2.59 -10.52 314 210 2141.89 2143.44 4.87 22.20 6.875 6.397 6.720 6.447 0.263 0.270 0.265 -2.42 -10.78 316 212 2146.64 2148.28 4.75 22.71 6.901 6.411 6.743 6.461 0.269 0.276 0.271 -2.39 -11.03 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 318 214 2151.38 2153.04 4.74 23.26 6.926 6.427 6.767 6.476 0.275 0.282 0.277 -2.38 -11.28 320 216 2156.09 2157.67 4.71 23.85 6.950 6.442 6.789 6.491 0.279 0.288 0.282 -2.34 -11.53 322 218 2160.68 2162.00 4.58 24.46 6.973 6.455 6.810 6.504 0.282 0.291 0.285 -2.01 -11.80 324 220 2164.06 2165.69 3.38 24.98 6.996 6.468 6.831 6.517 0.280 0.291 0.283 -1.66 -12.06 326 222 2167.27 2169.00 3.21 25.47 7.020 6.480 6.853 6.529 0.278 0.289 0.282 -1.60 -12.30 328 224 2170.37 2172.11 3.10 25.92 7.045 6.491 6.874 6.540 0.275 0.287 0.279 -1.54 -12.52 330 226 2173.34 2175.06 2.98 26.31 7.067 6.501 6.894 6.550 0.270 0.281 0.273 -1.49 -12.74 332 228 2176.22 2177.87 2.88 26.67 7.087 6.512 6.912 6.561 0.261 0.273 0.265 -1.44 -12.95 334 230 2178.98 2180.47 2.75 27.02 7.107 6.522 6.930 6.571 0.252 0.263 0.255 -1.27 -13.16 336 232 2181.13 2182.78 2.15 27.44 7.125 6.534 6.948 6.583 0.242 0.254 0.246 -0.98 -13.41 338 234 2182.91 2184.64 1.78 27.70 7.147 6.541 6.966 6.590 0.231 0.243 0.235 -0.89 -13.56 340 236 2184.59 2186.36 1.68 27.92 7.169 6.546 6.984 6.595 0.218 0.232 0.222 -0.86 -13.68 342 238 2186.21 2187.86 1.63 28.12 7.179 6.550 6.994 6.598 0.189 0.197 0.191 -0.98 -13.84 344 240 2188.26 2189.75 2.05 28.43 7.194 6.556 7.007 6.605 0.166 0.170 0.167 -1.08 -13.96 346 242 2190.39 2191.84 2.13 28.64 7.214 6.562 7.024 6.611 0.150 0.154 0.151 -1.10 -14.08 348 244 2192.59 2194.01 2.20 28.90 7.234 6.570 7.042 6.618 0.136 0.138 0.137 -1.13 -14.22 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 350 246 2194.85 2196.12 2.26 29.19 7.256 6.578 7.061 6.626 0.125 0.123 0.124 -1.01 -14.37 352 248 2196.79 2197.97 1.94 29.06 7.272 6.584 7.076 6.633 -0.120 -0.109 -0.117 -1.22 -14.30 354 250 2199.25 2200.28 2.46 29.33 7.293 6.590 7.094 6.638 -0.103 -0.094 -0.101 -1.26 -14.44 356 252 2201.75 2202.43 2.50 29.61 7.316 6.595 7.113 6.644 -0.092 -0.082 -0.089 -1.11 -14.58 358 254 2203.95 2204.72 2.20 29.73 7.338 6.597 7.131 6.645 -0.058 -0.053 -0.056 -1.23 -14.66 360 256 2206.50 2206.50 2.55 29.91 7.363 6.599 7.151 6.647 -0.037 -0.033 -0.036 -1.17 -14.75 362 258 2209.17 2209.17 2.67 30.01 7.390 6.599 7.171 6.647 0.000 0.000 0.000 -0.43 -14.82 364 260 2207.55 2207.55 -1.62 30.30 7.413 6.615 7.194 6.663 0.000 0.000 0.000 0.77 -14.97 σ 2.21 0.31 Z = 106 (Sg) 250 144 1824.21 1826.10 0.09 6.095 5.988 6.050 6.041 0.263 0.277 0.269 -8.99 0.32 252 146 1841.99 1843.96 17.77 0.78 6.124 6.006 6.075 6.059 0.279 0.293 0.284 -8.84 -0.02 254 148 1859.44 1861.24 17.45 1.49 6.151 6.023 6.098 6.076 0.289 0.304 0.295 -8.52 -0.36 256 150 1876.01 1877.88 16.57 2.15 6.171 6.031 6.114 6.084 0.289 0.302 0.295 -8.10 -0.68 258 152 1891.83 1893.88 15.82 3.21 6.193 6.044 6.132 6.096 0.291 0.304 0.297 -7.61 -1.11 260 154 1906.53 1908.71 1909.07 14.71 4.19 6.216 6.057 6.152 6.109 0.285 0.298 0.291 -7.30 -1.56 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 262 156 1920.94 1923.09 1923.39 14.40 5.20 6.239 6.069 6.171 6.122 0.281 0.293 0.286 -7.15 -2.03 264 158 1935.00 1937.16 14.06 6.20 6.263 6.082 6.191 6.135 0.278 0.291 0.283 -6.91 -2.50 266 160 1948.49 1950.76 13.49 7.30 6.284 6.093 6.209 6.145 0.273 0.286 0.278 -6.61 -3.04 268 162 1961.47 1963.63 12.97 8.21 6.302 6.100 6.223 6.152 0.263 0.278 0.269 -5.98 -3.57 270 164 1972.08 1974.38 10.62 8.77 6.325 6.111 6.242 6.163 0.254 0.270 0.260 -5.31 -3.92 272 166 1982.51 1984.86 10.43 9.32 6.343 6.118 6.256 6.170 0.237 0.255 0.244 -5.26 -4.26 274 168 1993.06 1995.20 10.55 9.89 6.349 6.116 6.260 6.168 0.195 0.209 0.201 -5.44 -4.62 276 170 2003.87 2005.90 10.81 10.49 6.363 6.119 6.270 6.171 0.169 0.181 0.174 -5.46 -4.94 278 172 2014.70 2016.64 10.83 11.00 6.381 6.123 6.284 6.175 0.150 0.160 0.154 -5.42 -5.21 280 174 2025.41 2027.28 10.71 11.50 6.403 6.129 6.301 6.181 0.137 0.146 0.140 -5.11 -5.48 282 176 2035.71 2037.24 10.30 11.43 6.415 6.134 6.311 6.186 -0.118 -0.118 -0.118 -5.50 -5.44 284 178 2046.60 2047.86 10.89 11.94 6.435 6.140 6.326 6.191 -0.107 -0.107 -0.107 -5.02 -5.70 286 180 2056.08 2057.38 9.47 12.42 6.453 6.143 6.340 6.195 -0.072 -0.075 -0.073 -4.91 -5.96 288 182 2066.00 2066.00 9.93 12.87 6.474 6.147 6.356 6.199 -0.048 -0.050 -0.049 -4.60 -6.20 290 184 2075.51 2075.51 9.51 13.22 6.495 6.149 6.371 6.201 0.000 0.000 0.000 -4.21 -6.39 292 186 2081.77 2081.77 6.26 13.88 6.522 6.173 6.397 6.224 0.000 0.000 0.000 -3.15 -6.72 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 294 188 2088.17 2089.29 6.40 14.52 6.552 6.200 6.427 6.251 0.050 0.068 0.057 -3.43 -7.02 296 190 2095.16 2096.41 6.99 15.02 6.583 6.225 6.457 6.276 0.084 0.107 0.092 -3.52 -7.27 298 192 2102.33 2103.61 7.16 15.40 6.617 6.244 6.487 6.295 0.119 0.141 0.127 -3.63 -7.43 300 194 2109.63 2111.61 7.31 16.07 6.753 6.388 6.626 6.438 0.385 0.384 0.384 -3.81 -8.40 302 196 2117.05 2119.01 7.42 16.88 6.777 6.404 6.648 6.454 0.387 0.386 0.387 -3.64 -8.71 304 198 2124.09 2125.94 7.04 17.31 6.801 6.418 6.670 6.468 0.389 0.388 0.388 -3.37 -9.00 306 200 2130.91 2132.50 6.82 17.67 6.741 6.334 6.603 6.385 0.215 0.232 0.221 -3.55 -8.51 308 202 2137.92 2139.48 7.00 18.34 6.771 6.355 6.630 6.405 0.231 0.247 0.237 -3.48 -8.85 310 204 2144.73 2146.19 6.82 19.01 6.797 6.372 6.655 6.422 0.241 0.255 0.246 -3.34 -9.16 312 206 2151.21 2152.68 6.47 19.65 6.822 6.387 6.677 6.437 0.249 0.262 0.253 -3.17 -9.47 314 208 2157.33 2158.67 6.12 20.31 6.847 6.403 6.700 6.453 0.259 0.270 0.263 -2.87 -9.79 316 210 2162.71 2164.25 5.38 20.81 6.870 6.416 6.721 6.466 0.261 0.270 0.264 -2.67 -10.04 318 212 2167.95 2169.60 5.24 21.31 6.895 6.430 6.743 6.480 0.264 0.272 0.267 -2.64 -10.29 320 214 2173.17 2174.83 5.22 21.79 6.919 6.445 6.766 6.494 0.269 0.276 0.272 -2.62 -10.53 322 216 2178.34 2179.91 5.18 22.25 6.944 6.459 6.788 6.508 0.274 0.280 0.276 -2.57 -10.76 324 218 2183.37 2184.69 5.02 22.69 6.967 6.472 6.809 6.521 0.277 0.283 0.279 -2.25 -10.96 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 326 220 2187.28 2188.95 3.92 23.22 6.989 6.486 6.829 6.535 0.275 0.283 0.278 -1.90 -11.23 328 222 2190.94 2192.72 3.66 23.68 7.012 6.498 6.850 6.547 0.273 0.281 0.276 -1.82 -11.46 330 224 2194.48 2196.29 3.54 24.12 7.036 6.509 6.871 6.558 0.269 0.278 0.272 -1.77 -11.67 332 226 2197.93 2199.71 3.45 24.59 7.057 6.519 6.890 6.568 0.263 0.273 0.266 -1.73 -11.91 334 228 2201.30 2203.00 3.37 25.08 7.078 6.530 6.909 6.578 0.256 0.266 0.259 -1.68 -12.16 336 230 2204.52 2206.12 3.22 25.55 7.098 6.539 6.926 6.588 0.249 0.259 0.252 -1.53 -12.41 338 232 2207.29 2208.94 2.77 26.17 7.116 6.553 6.944 6.601 0.241 0.251 0.244 -1.20 -12.75 340 234 2209.36 2211.11 2.07 26.45 7.138 6.558 6.963 6.607 0.230 0.242 0.233 -1.03 -12.91 342 236 2211.31 2213.10 1.95 26.72 7.159 6.563 6.980 6.612 0.217 0.230 0.221 -1.00 -13.07 344 238 2213.28 2214.91 1.97 27.06 7.168 6.568 6.988 6.616 0.186 0.193 0.188 -1.15 -13.26 346 240 2215.58 2217.12 2.30 27.32 7.185 6.574 7.003 6.622 0.167 0.174 0.169 -1.20 -13.39 348 242 2217.96 2219.49 2.38 27.57 7.204 6.580 7.020 6.629 0.152 0.158 0.154 -1.23 -13.53 350 244 2220.44 2221.93 2.48 27.85 7.224 6.588 7.038 6.636 0.138 0.141 0.139 -1.27 -13.69 352 246 2223.00 2224.35 2.57 28.15 7.247 6.595 7.057 6.643 0.126 0.127 0.127 -1.10 -13.84 354 248 2224.86 2226.16 1.86 28.07 7.265 6.599 7.072 6.647 0.104 0.109 0.106 -1.01 -13.89 356 250 2227.52 2228.53 2.66 28.27 7.282 6.606 7.088 6.654 -0.102 -0.092 -0.099 -1.40 -13.91 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 358 252 2230.29 2230.99 2.77 28.54 7.305 6.611 7.107 6.659 -0.091 -0.081 -0.088 -1.22 -14.05 360 254 2232.67 2233.45 2.38 28.72 7.327 6.613 7.124 6.661 -0.058 -0.052 -0.056 -1.33 -14.15 362 256 2235.42 2235.42 2.75 28.92 7.351 6.615 7.144 6.663 -0.037 -0.033 -0.036 -1.35 -14.25 364 258 2238.23 2238.23 2.81 29.06 7.378 6.615 7.164 6.663 0.000 0.000 0.000 -0.57 -14.33 366 260 2236.94 2236.94 -1.30 29.39 7.401 6.632 7.187 6.680 0.000 0.000 0.000 0.61 -14.50 σ 2.49 0.33 Z = 108 (Hs) 258 150 1876.56 1878.47 0.55 6.177 6.055 6.126 6.107 0.286 0.298 0.291 -8.45 0.04 260 152 1893.09 1895.15 16.54 1.27 6.198 6.065 6.143 6.118 0.286 0.297 0.290 -7.99 -0.29 262 154 1908.69 1910.75 15.59 2.16 6.215 6.072 6.157 6.124 0.270 0.279 0.274 -7.74 -0.75 264 156 1923.94 1926.03 1926.77 15.25 3.00 6.239 6.085 6.176 6.137 0.268 0.277 0.272 -7.56 -1.13 266 158 1938.82 1941.02 1941.34 14.88 3.82 6.263 6.097 6.196 6.149 0.269 0.279 0.273 -7.36 -1.48 268 160 1953.32 1955.63 14.50 4.83 6.284 6.108 6.214 6.160 0.265 0.276 0.270 -7.17 -1.91 270 162 1967.54 1969.76 14.22 6.08 6.303 6.117 6.230 6.169 0.259 0.272 0.264 -6.49 -2.41 272 164 1979.00 1981.33 11.46 6.92 6.325 6.127 6.248 6.179 0.249 0.265 0.255 -5.71 -2.87 274 166 1990.20 1992.60 11.20 7.69 6.345 6.136 6.263 6.188 0.235 0.253 0.242 -5.62 -3.33 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 276 168 2001.58 2003.65 11.38 8.52 6.349 6.133 6.265 6.185 0.190 0.202 0.194 -5.79 -3.93 278 170 2013.05 2015.09 11.46 9.17 6.365 6.138 6.278 6.190 0.170 0.181 0.174 -5.75 -4.26 280 172 2024.43 2026.44 11.38 9.73 6.383 6.143 6.291 6.195 0.152 0.162 0.156 -5.69 -4.54 282 174 2035.67 2037.61 11.24 10.26 6.403 6.149 6.307 6.201 0.138 0.148 0.142 -5.36 -4.82 284 176 2046.11 2047.92 10.44 10.40 6.414 6.153 6.316 6.205 0.105 0.113 0.108 -5.33 -5.03 286 178 2057.27 2058.53 11.16 10.67 6.434 6.157 6.331 6.209 -0.105 -0.104 -0.104 -5.28 -5.07 288 180 2067.27 2068.58 10.00 11.20 6.452 6.161 6.344 6.213 -0.070 -0.072 -0.071 -5.16 -5.35 290 182 2077.69 2077.69 10.41 11.69 6.472 6.165 6.359 6.217 -0.047 -0.049 -0.048 -4.83 -5.60 292 184 2087.60 2087.60 9.91 12.09 6.492 6.167 6.374 6.219 0.000 0.000 0.000 -4.45 -5.82 294 186 2094.52 2094.52 6.92 12.75 6.519 6.191 6.400 6.242 0.000 0.000 0.000 -3.48 -6.15 296 188 2101.51 2101.51 6.99 13.34 6.548 6.217 6.429 6.268 0.044 0.059 0.050 -3.68 -6.43 298 190 2109.20 2111.64 7.69 14.04 6.758 6.433 6.642 6.482 0.452 0.449 0.451 -4.22 -7.16 300 192 2117.48 2119.76 8.28 15.16 6.755 6.422 6.637 6.471 0.419 0.418 0.418 -4.19 -7.42 302 194 2125.70 2127.85 8.22 16.07 6.767 6.426 6.647 6.475 0.404 0.406 0.405 -4.09 -7.66 304 196 2133.69 2135.72 7.99 16.64 6.785 6.434 6.662 6.484 0.398 0.400 0.398 -3.93 -7.92 306 198 2141.29 2143.16 7.60 17.20 6.804 6.445 6.680 6.494 0.394 0.397 0.395 -3.61 -8.18 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 308 200 2148.07 2150.11 6.78 17.16 6.825 6.455 6.697 6.504 0.389 0.393 0.390 -3.33 -8.43 310 202 2154.91 2156.50 6.85 17.00 6.775 6.386 6.642 6.436 0.249 0.266 0.255 -3.78 -8.20 312 204 2162.31 2163.83 7.40 17.58 6.799 6.398 6.663 6.448 0.250 0.268 0.256 -3.63 -8.45 314 206 2169.39 2170.91 7.08 18.18 6.823 6.412 6.684 6.461 0.255 0.273 0.261 -3.47 -8.73 316 208 2176.15 2177.46 6.76 18.82 6.847 6.426 6.706 6.476 0.262 0.280 0.268 -3.15 -9.02 318 210 2182.02 2183.58 5.87 19.31 6.869 6.440 6.727 6.490 0.263 0.278 0.268 -2.92 -9.29 320 212 2187.76 2189.43 5.74 19.81 6.892 6.454 6.748 6.503 0.265 0.277 0.269 -2.89 -9.56 322 214 2193.46 2195.13 5.70 20.30 6.916 6.468 6.769 6.517 0.269 0.278 0.272 -2.86 -9.80 324 216 2199.10 2200.66 5.63 20.75 6.940 6.480 6.790 6.530 0.273 0.280 0.275 -2.79 -10.03 326 218 2204.52 2205.87 5.43 21.16 6.963 6.491 6.810 6.540 0.274 0.280 0.276 -2.51 -10.24 328 220 2209.03 2210.67 4.51 21.74 6.982 6.504 6.829 6.553 0.271 0.277 0.273 -2.15 -10.53 330 222 2213.12 2214.86 4.09 22.18 7.004 6.515 6.848 6.564 0.266 0.271 0.267 -2.04 -10.75 332 224 2217.10 2218.87 3.98 22.62 7.025 6.524 6.866 6.573 0.259 0.263 0.260 -2.00 -10.98 334 226 2221.03 2222.77 3.93 23.10 7.046 6.534 6.885 6.583 0.253 0.257 0.254 -1.97 -11.22 336 228 2224.88 2226.58 3.85 23.58 7.067 6.544 6.903 6.592 0.248 0.253 0.249 -1.92 -11.46 338 230 2228.61 2230.27 3.73 24.09 7.088 6.553 6.922 6.602 0.242 0.248 0.244 -1.82 -11.71 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 340 232 2232.10 2233.71 3.48 24.80 7.107 6.566 6.940 6.615 0.236 0.243 0.238 -1.47 -12.05 342 234 2234.49 2236.24 2.40 25.13 7.129 6.572 6.958 6.621 0.225 0.234 0.228 -1.21 -12.24 344 236 2236.80 2238.59 2.30 25.49 7.149 6.578 6.975 6.626 0.212 0.222 0.215 -1.18 -12.44 346 238 2239.16 2240.82 2.37 25.88 7.160 6.584 6.985 6.632 0.186 0.194 0.189 -1.29 -12.64 348 240 2241.74 2243.35 2.57 26.16 7.177 6.590 7.000 6.639 0.169 0.176 0.171 -1.34 -12.80 350 242 2244.41 2246.03 2.68 26.46 7.195 6.597 7.016 6.646 0.153 0.159 0.155 -1.39 -12.96 352 244 2247.21 2248.79 2.80 26.77 7.215 6.605 7.033 6.653 0.139 0.143 0.140 -1.43 -13.13 354 246 2250.09 2251.50 2.87 27.08 7.238 6.611 7.053 6.659 0.127 0.131 0.128 -1.20 -13.30 356 248 2252.05 2253.45 1.97 27.19 7.256 6.615 7.067 6.663 0.106 0.112 0.108 -1.07 -13.35 358 250 2254.72 2255.71 2.67 27.20 7.271 6.621 7.082 6.669 -0.100 -0.089 -0.097 -1.54 -13.38 360 252 2257.76 2258.47 3.04 27.47 7.295 6.625 7.100 6.673 -0.090 -0.079 -0.086 -1.34 -13.52 362 254 2260.37 2261.14 2.60 27.70 7.316 6.628 7.118 6.676 -0.056 -0.050 -0.054 -1.44 -13.64 364 256 2263.32 2263.32 2.96 27.91 7.340 6.629 7.137 6.678 -0.036 -0.032 -0.035 -1.33 -13.75 366 258 2266.29 2266.29 2.96 28.06 7.367 6.630 7.157 6.678 0.000 0.000 0.000 -1.28 -13.83 384 276 2266.42 2267.63 0.58 30.80 7.613 6.810 7.396 6.857 0.193 0.213 0.199 -0.34 -15.15 386 278 2267.12 2268.30 0.69 31.27 7.639 6.835 7.423 6.881 0.210 0.233 0.216 -0.35 -15.37 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 388 280 2267.76 2268.94 0.64 31.69 7.666 6.855 7.449 6.902 0.224 0.247 0.230 -0.30 -15.58 390 282 2268.27 2269.46 0.51 32.06 7.693 6.871 7.474 6.917 0.236 0.257 0.242 -0.24 -15.75 392 284 2268.67 2269.88 0.40 32.40 7.719 6.886 7.499 6.932 0.246 0.264 0.251 -0.19 -15.92 394 286 2268.96 2270.19 0.29 32.80 7.743 6.901 7.521 6.948 0.254 0.270 0.258 -0.13 -16.12 396 288 2269.15 2270.33 0.19 33.21 7.764 6.917 7.543 6.963 0.259 0.274 0.263 -0.07 -16.32 398 290 2269.19 2270.28 0.04 33.60 7.786 6.933 7.564 6.979 0.263 0.277 0.267 0.05 -16.51 σ 2.68 0.57 Z = 110 (Ds) 262 152 1892.91 1894.94 -0.18 6.205 6.088 6.156 6.140 0.282 0.293 0.286 -8.38 0.39 264 154 1909.45 1911.31 16.54 0.76 6.216 6.088 6.163 6.140 0.257 0.262 0.259 -8.17 0.00 266 156 1925.43 1927.39 15.98 1.49 6.238 6.099 6.181 6.151 0.255 0.258 0.256 -7.89 -0.36 268 158 1940.94 1943.10 15.51 2.12 6.261 6.110 6.200 6.162 0.253 0.257 0.255 -7.70 -0.70 270 160 1956.16 1958.44 1958.52 15.22 2.84 6.283 6.121 6.218 6.173 0.251 0.256 0.253 -7.57 -1.07 272 162 1971.20 1973.42 15.04 3.66 6.304 6.132 6.235 6.184 0.248 0.255 0.250 -6.96 -1.48 274 164 1983.65 1985.89 12.45 4.65 6.319 6.138 6.247 6.190 0.227 0.235 0.230 -6.28 -2.07 276 166 1996.29 1998.24 12.64 6.09 6.331 6.142 6.256 6.194 0.200 0.208 0.203 -6.28 -2.66 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 278 168 2008.67 2010.68 12.37 7.09 6.349 6.150 6.271 6.202 0.185 0.195 0.189 -6.17 -3.13 280 170 2020.82 2022.89 12.15 7.77 6.368 6.157 6.286 6.209 0.170 0.181 0.174 -6.06 -3.51 282 172 2032.78 2034.89 11.96 8.35 6.385 6.162 6.299 6.214 0.153 0.164 0.157 -5.97 -3.83 284 174 2044.60 2046.66 11.82 8.94 6.405 6.169 6.314 6.220 0.139 0.149 0.143 -5.61 -4.13 286 176 2055.48 2057.39 10.87 9.37 6.415 6.172 6.323 6.223 0.107 0.115 0.110 -5.52 -4.34 288 178 2066.70 2067.94 11.22 9.43 6.433 6.174 6.335 6.226 -0.101 -0.100 -0.101 -5.56 -4.44 290 180 2077.27 2078.56 10.57 10.00 6.450 6.178 6.348 6.230 -0.067 -0.067 -0.067 -5.44 -4.74 292 182 2088.19 2088.19 10.92 10.50 6.470 6.182 6.363 6.234 -0.045 -0.046 -0.046 -5.08 -5.00 294 184 2098.56 2098.56 10.36 10.96 6.490 6.185 6.378 6.237 0.000 0.000 0.000 -4.69 -5.23 296 186 2106.14 2106.14 7.58 11.62 6.517 6.208 6.404 6.260 0.000 0.000 0.000 -3.80 -5.57 298 188 2113.71 2113.71 7.58 12.20 6.545 6.232 6.431 6.283 -0.033 -0.042 -0.037 -3.85 -5.86 300 190 2122.63 2125.04 8.92 13.43 6.755 6.448 6.644 6.498 0.447 0.443 0.446 -4.51 -6.20 302 192 2131.49 2133.78 8.86 14.00 6.764 6.450 6.651 6.500 0.429 0.427 0.429 -4.44 -6.47 304 194 2140.21 2142.37 8.72 14.51 6.775 6.454 6.660 6.503 0.414 0.414 0.414 -4.34 -6.73 306 196 2148.69 2150.72 8.48 15.00 6.789 6.460 6.673 6.510 0.403 0.406 0.404 -4.18 -6.99 308 198 2156.78 2158.68 8.09 15.49 6.806 6.468 6.687 6.517 0.396 0.400 0.397 -3.88 -7.25 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 310 200 2164.13 2166.21 7.35 16.06 6.829 6.482 6.708 6.531 0.395 0.399 0.396 -3.60 -7.54 312 202 2171.11 2173.27 6.98 16.19 6.852 6.495 6.729 6.544 0.394 0.398 0.395 -3.46 -7.82 314 204 2178.47 2180.15 7.36 16.16 6.803 6.428 6.674 6.478 0.267 0.284 0.273 -3.87 -7.79 316 206 2186.07 2187.67 7.59 16.68 6.824 6.437 6.692 6.487 0.263 0.283 0.270 -3.74 -8.01 318 208 2193.36 2194.74 7.30 17.22 6.846 6.448 6.711 6.498 0.263 0.284 0.271 -3.44 -8.25 320 210 2199.84 2201.45 6.48 17.83 6.868 6.463 6.731 6.512 0.264 0.282 0.270 -3.22 -8.57 322 212 2206.16 2207.84 6.31 18.40 6.891 6.478 6.753 6.527 0.266 0.282 0.272 -3.16 -8.87 324 214 2212.37 2214.03 6.22 18.91 6.915 6.492 6.774 6.541 0.270 0.284 0.275 -3.10 -9.13 326 216 2218.46 2220.02 6.08 19.36 6.939 6.504 6.795 6.553 0.274 0.286 0.278 -3.00 -9.35 328 218 2224.27 2225.71 5.82 19.75 6.961 6.513 6.814 6.562 0.274 0.284 0.277 -2.75 -9.56 330 220 2229.36 2230.98 5.09 20.34 6.980 6.526 6.832 6.575 0.271 0.280 0.274 -2.38 -9.83 332 222 2233.87 2235.58 4.50 20.75 6.999 6.535 6.849 6.583 0.263 0.269 0.265 -2.25 -10.04 334 224 2238.29 2240.02 4.43 21.19 7.018 6.543 6.865 6.591 0.254 0.259 0.256 -2.23 -10.26 336 226 2242.69 2244.40 4.40 21.66 7.038 6.550 6.882 6.599 0.247 0.250 0.248 -2.21 -10.48 338 228 2247.02 2248.74 4.33 22.14 7.059 6.558 6.900 6.606 0.241 0.244 0.242 -2.17 -10.71 340 230 2251.29 2252.99 4.27 22.67 7.079 6.567 6.918 6.615 0.236 0.239 0.237 -2.12 -10.97 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 342 232 2255.43 2257.02 4.14 23.33 7.099 6.579 6.936 6.627 0.231 0.233 0.232 -1.74 -11.29 344 234 2258.24 2259.98 2.81 23.75 7.120 6.585 6.953 6.634 0.220 0.225 0.221 -1.42 -11.51 346 236 2260.97 2262.76 2.73 24.17 7.139 6.592 6.969 6.640 0.206 0.213 0.208 -1.40 -11.74 348 238 2263.75 2265.48 2.78 24.59 7.153 6.599 6.982 6.647 0.186 0.193 0.188 -1.47 -11.95 350 240 2266.67 2268.39 2.93 24.94 7.169 6.606 6.997 6.655 0.169 0.176 0.171 -1.52 -12.16 352 242 2269.72 2271.44 3.05 25.31 7.187 6.614 7.013 6.662 0.153 0.159 0.155 -1.57 -12.37 354 244 2272.87 2274.55 3.15 25.66 7.207 6.621 7.030 6.669 0.139 0.144 0.141 -1.60 -12.55 356 246 2276.07 2277.59 3.20 25.98 7.230 6.627 7.049 6.675 0.128 0.133 0.130 -1.31 -12.72 358 248 2278.15 2279.66 2.09 26.10 7.247 6.631 7.063 6.679 0.107 0.114 0.109 -1.14 -12.79 360 250 2280.86 2281.83 2.71 26.14 7.261 6.635 7.076 6.683 -0.096 -0.085 -0.093 -1.68 -12.85 362 252 2284.18 2284.87 3.31 26.41 7.284 6.639 7.095 6.687 -0.087 -0.076 -0.084 -1.47 -12.98 364 254 2287.04 2287.81 2.87 26.68 7.305 6.642 7.111 6.690 -0.053 -0.047 -0.051 -1.57 -13.12 366 256 2290.22 2290.22 3.18 26.90 7.330 6.644 7.131 6.692 -0.035 -0.030 -0.034 -1.42 -13.24 368 258 2293.35 2293.35 3.13 27.07 7.356 6.644 7.151 6.692 0.000 0.000 0.000 -0.83 -13.33 380 270 2293.71 2294.78 0.61 28.65 7.516 6.759 7.305 6.806 0.132 0.145 0.136 -0.32 -14.11 382 272 2294.35 2295.54 0.63 28.92 7.544 6.778 7.331 6.825 0.151 0.164 0.155 -0.36 -14.24 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 384 274 2295.11 2296.35 0.77 29.27 7.572 6.803 7.360 6.850 0.172 0.190 0.177 -0.45 -14.41 386 276 2296.13 2297.35 1.01 29.70 7.601 6.832 7.390 6.878 0.194 0.218 0.201 -0.56 -14.60 388 278 2297.25 2298.44 1.12 30.13 7.628 6.856 7.417 6.902 0.211 0.238 0.218 -0.56 -14.80 390 280 2298.29 2299.46 1.04 30.53 7.655 6.876 7.443 6.923 0.224 0.252 0.232 -0.48 -14.99 392 282 2299.14 2300.37 0.85 30.87 7.681 6.892 7.468 6.939 0.235 0.262 0.243 -0.40 -15.15 394 284 2299.88 2301.16 0.74 31.21 7.707 6.908 7.493 6.954 0.246 0.270 0.253 -0.37 -15.32 396 286 2300.56 2301.83 0.68 31.60 7.731 6.924 7.516 6.970 0.254 0.277 0.260 -0.33 -15.50 398 288 2301.15 2302.35 0.59 32.00 7.753 6.940 7.537 6.986 0.259 0.281 0.265 -0.28 -15.70 400 290 2301.59 2302.70 0.44 32.40 7.775 6.955 7.558 7.001 0.263 0.284 0.269 -0.14 -15.89 402 292 2301.67 2302.88 0.08 32.74 7.797 6.970 7.580 7.016 0.268 0.288 0.273 0.01 -16.08 σ 2.36 0.08 Z = 112 (Cn) 270 158 1941.46 1943.68 0.52 6.264 6.130 6.209 6.182 0.246 0.249 0.247 -8.08 0.08 272 160 1957.50 1959.80 16.04 1.34 6.284 6.138 6.224 6.190 0.240 0.242 0.241 -8.00 -0.35 274 162 1973.42 1975.61 15.92 2.22 6.305 6.149 6.242 6.200 0.238 0.240 0.239 -7.42 -0.79 276 164 1986.99 1989.22 13.57 3.34 6.319 6.153 6.252 6.205 0.215 0.218 0.216 -6.85 -1.30 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 278 166 2000.65 2002.77 13.67 4.36 6.332 6.160 6.263 6.211 0.193 0.198 0.195 -6.82 -1.80 280 168 2014.10 2016.23 13.44 5.43 6.351 6.169 6.279 6.220 0.179 0.186 0.182 -6.64 -2.33 282 170 2027.07 2029.31 12.97 6.25 6.370 6.176 6.294 6.228 0.168 0.176 0.171 -6.42 -2.75 284 172 2039.70 2041.98 12.63 6.92 6.388 6.182 6.308 6.234 0.153 0.163 0.157 -6.29 -3.09 286 174 2052.14 2054.34 12.44 7.54 6.407 6.188 6.322 6.240 0.139 0.150 0.143 -5.88 -3.42 288 176 2063.40 2065.40 11.25 7.92 6.417 6.191 6.330 6.242 0.109 0.118 0.113 -5.71 -3.59 290 178 2074.81 2076.32 11.42 8.11 6.432 6.195 6.341 6.246 0.078 0.084 0.080 -5.71 -3.84 292 180 2085.91 2085.91 11.09 8.63 6.448 6.195 6.352 6.247 0.045 0.048 0.046 -5.66 -4.14 294 182 2097.23 2097.23 11.32 9.04 6.467 6.199 6.366 6.250 0.000 0.000 0.000 -5.72 -4.43 296 184 2108.35 2108.35 11.12 9.80 6.489 6.203 6.382 6.254 0.000 0.000 0.000 -4.93 -4.63 298 186 2116.59 2116.59 8.24 10.46 6.515 6.225 6.408 6.277 0.000 0.000 0.000 -4.13 -4.96 300 188 2124.73 2124.73 8.14 11.02 6.541 6.248 6.433 6.299 0.007 0.009 0.008 -4.10 -5.28 302 190 2134.10 2136.61 9.36 11.46 6.766 6.481 6.662 6.530 0.458 0.458 0.458 -4.76 -5.37 304 192 2143.46 2145.89 9.37 11.97 6.778 6.483 6.670 6.532 0.443 0.443 0.443 -4.68 -5.62 306 194 2152.66 2154.93 9.20 12.45 6.782 6.480 6.673 6.529 0.420 0.421 0.420 -4.60 -5.84 308 196 2161.67 2163.78 9.01 12.98 6.793 6.483 6.682 6.532 0.406 0.408 0.407 -4.44 -6.10 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 310 198 2170.27 2172.25 8.60 13.49 6.806 6.487 6.692 6.536 0.394 0.398 0.396 -4.15 -6.36 312 200 2178.20 2180.38 7.93 14.07 6.830 6.502 6.714 6.551 0.395 0.399 0.396 -3.88 -6.64 314 202 2185.76 2188.03 7.56 14.65 6.856 6.519 6.738 6.568 0.397 0.400 0.398 -3.75 -6.94 316 204 2193.50 2195.21 7.73 15.02 6.813 6.463 6.691 6.512 0.291 0.305 0.296 -4.02 -7.18 318 206 2201.41 2203.03 7.91 15.34 6.827 6.464 6.701 6.513 0.275 0.293 0.281 -3.94 -7.34 320 208 2209.09 2210.58 7.69 15.73 6.844 6.469 6.715 6.518 0.264 0.286 0.272 -3.72 -7.54 322 210 2216.25 2217.87 7.15 16.40 6.866 6.484 6.736 6.533 0.264 0.285 0.271 -3.53 -7.85 324 212 2223.17 2224.83 6.92 17.01 6.889 6.499 6.757 6.549 0.267 0.286 0.273 -3.43 -8.15 326 214 2229.90 2231.54 6.74 17.53 6.914 6.514 6.779 6.563 0.271 0.289 0.277 -3.34 -8.40 328 216 2236.43 2238.00 6.53 17.98 6.938 6.526 6.800 6.575 0.275 0.291 0.280 -3.22 -8.63 330 218 2242.67 2244.17 6.24 18.39 6.960 6.535 6.819 6.584 0.275 0.289 0.280 -3.00 -8.86 332 220 2248.33 2249.92 5.67 18.97 6.980 6.548 6.837 6.597 0.274 0.286 0.278 -2.62 -9.15 334 222 2253.24 2254.93 4.91 19.37 6.997 6.556 6.852 6.605 0.263 0.273 0.266 -2.46 -9.38 336 224 2258.09 2259.80 4.85 19.80 7.015 6.564 6.868 6.612 0.253 0.261 0.256 -2.44 -9.59 338 226 2262.90 2264.64 4.81 20.21 7.034 6.570 6.884 6.619 0.246 0.251 0.248 -2.42 -9.80 340 228 2267.67 2269.46 4.78 20.65 7.054 6.577 6.900 6.625 0.239 0.242 0.240 -2.40 -10.01 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 342 230 2272.45 2274.23 4.77 21.16 7.073 6.584 6.917 6.633 0.232 0.234 0.233 -2.39 -10.25 344 232 2277.20 2278.83 4.75 21.77 7.094 6.594 6.935 6.643 0.228 0.229 0.228 -2.04 -10.53 346 234 2280.48 2282.27 3.28 22.24 7.113 6.601 6.952 6.649 0.216 0.218 0.217 -1.65 -10.77 348 236 2283.69 2285.58 3.21 22.72 7.132 6.608 6.967 6.656 0.202 0.207 0.204 -1.64 -11.02 350 238 2286.94 2288.81 3.25 23.19 7.146 6.615 6.981 6.663 0.184 0.189 0.186 -1.70 -11.27 352 240 2290.33 2292.18 3.40 23.66 7.162 6.623 6.995 6.671 0.168 0.172 0.169 -1.75 -11.52 354 242 2293.82 2295.66 3.49 24.10 7.180 6.630 7.011 6.678 0.153 0.157 0.154 -1.78 -11.74 356 244 2297.36 2299.15 3.53 24.49 7.200 6.636 7.027 6.684 0.139 0.145 0.141 -1.78 -11.93 358 246 2300.88 2302.53 3.53 24.81 7.222 6.642 7.046 6.690 0.129 0.135 0.131 -1.46 -12.09 360 248 2303.09 2304.70 2.21 24.94 7.239 6.646 7.060 6.694 0.108 0.117 0.111 -1.21 -12.16 362 250 2305.78 2307.02 2.68 24.92 7.251 6.651 7.071 6.699 0.079 0.080 0.079 -1.61 -12.30 364 252 2309.09 2309.93 3.32 24.92 7.270 6.654 7.086 6.702 0.052 0.048 0.051 -1.72 -12.48 366 254 2312.56 2312.56 3.46 25.52 7.292 6.655 7.103 6.703 0.005 0.005 0.005 -1.80 -12.63 368 256 2316.07 2316.07 3.51 25.84 7.318 6.657 7.123 6.705 0.000 0.000 0.000 -1.73 -12.72 370 258 2319.41 2319.41 3.34 26.05 7.345 6.658 7.144 6.706 0.000 0.000 0.000 -0.97 -12.80 378 266 2319.62 2320.54 0.63 27.18 7.446 6.738 7.244 6.786 0.085 0.097 0.088 -0.43 -13.38 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 380 268 2320.50 2321.43 0.88 27.39 7.474 6.756 7.270 6.804 0.107 0.119 0.110 -0.45 -13.49 382 270 2321.83 2323.73 1.33 28.11 7.650 6.969 7.456 7.014 0.437 0.431 0.435 -0.69 -13.92 384 272 2323.12 2325.02 1.30 28.78 7.673 6.985 7.479 7.030 0.437 0.432 0.436 -0.62 -14.12 386 274 2324.25 2326.11 1.12 29.13 7.693 6.999 7.498 7.045 0.436 0.431 0.435 -0.52 -14.32 388 276 2325.11 2326.95 0.87 28.99 7.702 7.003 7.507 7.048 0.423 0.419 0.422 -0.43 -14.50 390 278 2325.94 2327.62 0.82 28.69 7.689 6.985 7.494 7.031 0.384 0.379 0.383 -0.50 -14.65 392 280 2327.64 2328.80 1.70 29.35 7.643 6.894 7.437 6.941 0.223 0.253 0.231 -0.65 -14.41 394 282 2328.81 2330.08 1.17 29.68 7.669 6.912 7.461 6.958 0.234 0.263 0.242 -0.57 -14.56 396 284 2329.89 2331.22 1.08 30.01 7.694 6.928 7.486 6.974 0.244 0.271 0.252 -0.54 -14.72 398 286 2330.92 2332.22 1.03 30.36 7.718 6.944 7.509 6.990 0.252 0.277 0.259 -0.51 -14.89 400 288 2331.89 2333.11 0.97 30.74 7.741 6.959 7.531 7.005 0.258 0.282 0.264 -0.46 -15.06 402 290 2332.71 2333.85 0.82 31.12 7.763 6.974 7.552 7.020 0.262 0.285 0.268 -0.34 -15.24 404 292 2333.21 2334.38 0.50 31.54 7.785 6.991 7.573 7.037 0.267 0.290 0.273 -0.16 -15.45 406 294 2333.36 2334.60 0.15 31.81 7.810 7.002 7.595 7.047 0.271 0.292 0.277 -0.06 -15.59 408 296 2333.39 2334.67 0.03 32.07 7.834 7.012 7.617 7.057 0.273 0.292 0.278 -0.02 -15.72 410 298 2333.36 2334.66 -0.04 32.33 7.856 7.023 7.638 7.068 0.274 0.292 0.279 0.02 -15.87 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) σ Z = 114 (Fl) 274 160 1957.44 1959.76 -0.06 6.287 6.157 6.233 6.209 0.232 0.232 0.232 -8.44 0.38 276 162 1974.23 1976.42 16.79 0.81 6.308 6.167 6.250 6.219 0.231 0.230 0.231 -7.88 -0.04 278 164 1988.86 1991.27 14.63 1.87 6.323 6.173 6.262 6.224 0.212 0.212 0.212 -7.32 -0.54 280 166 2003.48 2005.77 14.62 2.83 6.336 6.179 6.273 6.230 0.190 0.192 0.190 -7.33 -0.95 282 168 2018.00 2020.20 14.51 3.90 6.354 6.188 6.288 6.240 0.175 0.179 0.177 -7.12 -1.41 284 170 2031.78 2034.21 13.78 4.71 6.375 6.196 6.304 6.248 0.167 0.172 0.169 -6.79 -1.86 286 172 2045.12 2047.60 13.34 5.42 6.393 6.203 6.318 6.254 0.154 0.163 0.158 -6.62 -2.22 288 174 2058.21 2060.54 13.09 6.07 6.410 6.208 6.331 6.259 0.140 0.151 0.144 -6.15 -2.54 290 176 2069.74 2071.83 11.53 6.34 6.420 6.209 6.338 6.260 0.111 0.122 0.115 -5.89 -2.71 292 178 2081.74 2083.20 12.01 6.93 6.432 6.210 6.346 6.262 0.074 0.077 0.075 -6.03 -3.15 294 180 2093.49 2093.49 11.74 7.58 6.447 6.211 6.357 6.262 0.039 0.039 0.039 -5.98 -3.49 296 182 2105.41 2105.41 11.93 8.18 6.466 6.215 6.371 6.267 0.000 0.000 0.000 -5.94 -3.76 298 184 2116.93 2116.93 11.52 8.58 6.488 6.220 6.386 6.271 0.000 0.000 0.000 -5.17 -3.96 300 186 2125.82 2125.82 8.88 9.22 6.514 6.242 6.412 6.293 0.000 0.000 0.000 -4.45 -4.29 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 302 188 2134.59 2134.59 8.77 9.85 6.540 6.264 6.437 6.315 0.000 0.000 0.000 -4.41 -4.61 304 190 2144.16 2146.74 9.57 10.06 6.777 6.514 6.680 6.563 0.469 0.475 0.471 -4.98 -4.74 306 192 2154.01 2156.51 9.85 10.55 6.789 6.514 6.688 6.563 0.454 0.458 0.456 -4.93 -4.97 308 194 2163.70 2166.12 9.69 11.04 6.802 6.518 6.698 6.567 0.442 0.445 0.443 -4.79 -5.21 310 196 2173.14 2175.35 9.44 11.47 6.801 6.510 6.696 6.559 0.413 0.416 0.414 -4.68 -5.41 312 198 2182.22 2184.31 9.08 11.95 6.810 6.510 6.702 6.559 0.396 0.400 0.398 -4.42 -5.65 314 200 2190.73 2192.99 8.51 12.53 6.833 6.524 6.722 6.573 0.395 0.399 0.397 -4.17 -5.93 316 202 2198.89 2201.23 8.16 13.13 6.859 6.541 6.746 6.590 0.397 0.401 0.399 -4.04 -6.21 318 204 2207.01 2208.75 8.12 13.52 6.813 6.482 6.696 6.531 0.296 0.306 0.300 -4.22 -6.36 320 206 2215.29 2216.95 8.28 13.89 6.827 6.484 6.707 6.533 0.279 0.294 0.284 -4.12 -6.57 322 208 2223.37 2224.96 8.08 14.28 6.843 6.488 6.720 6.537 0.266 0.285 0.272 -3.99 -6.79 324 210 2231.15 2232.77 7.77 14.90 6.863 6.501 6.738 6.550 0.263 0.282 0.269 -3.84 -7.08 326 212 2238.65 2240.28 7.50 15.48 6.886 6.516 6.759 6.565 0.264 0.284 0.271 -3.70 -7.37 328 214 2245.89 2247.50 7.24 15.99 6.911 6.530 6.781 6.579 0.269 0.287 0.275 -3.58 -7.62 330 216 2252.88 2254.48 6.99 16.45 6.935 6.543 6.802 6.591 0.273 0.289 0.279 -3.45 -7.85 332 218 2259.61 2261.18 6.72 16.94 6.958 6.554 6.822 6.602 0.274 0.289 0.279 -3.28 -8.11 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 334 220 2265.90 2267.47 6.30 17.57 6.978 6.568 6.841 6.616 0.274 0.289 0.279 -2.89 -8.43 336 222 2271.30 2272.96 5.40 18.06 6.995 6.577 6.856 6.625 0.262 0.274 0.266 -2.71 -8.72 338 224 2276.61 2278.30 5.31 18.52 7.013 6.585 6.871 6.633 0.253 0.262 0.256 -2.66 -8.96 340 226 2281.82 2283.60 5.21 18.92 7.032 6.591 6.887 6.639 0.245 0.253 0.248 -2.63 -9.18 342 228 2287.03 2288.88 5.21 19.36 7.050 6.597 6.902 6.645 0.237 0.242 0.239 -2.63 -9.41 344 230 2292.28 2294.13 5.26 19.84 7.069 6.604 6.919 6.652 0.230 0.233 0.231 -2.64 -9.64 346 232 2297.55 2299.23 5.27 20.36 7.090 6.613 6.936 6.661 0.226 0.227 0.226 -2.27 -9.86 348 234 2301.30 2303.17 3.75 20.83 7.108 6.619 6.952 6.667 0.213 0.215 0.214 -1.89 -10.08 350 236 2305.03 2307.02 3.73 21.34 7.126 6.625 6.967 6.673 0.200 0.202 0.200 -1.89 -10.31 352 238 2308.79 2310.82 3.76 21.85 7.141 6.632 6.980 6.680 0.184 0.186 0.184 -1.93 -10.54 354 240 2312.67 2314.64 3.88 22.33 7.157 6.640 6.994 6.688 0.167 0.169 0.168 -1.98 -10.74 356 242 2316.58 2318.53 3.91 22.76 7.175 6.646 7.010 6.694 0.153 0.157 0.155 -1.97 -10.93 358 244 2320.47 2322.38 3.89 23.12 7.194 6.651 7.026 6.699 0.141 0.147 0.143 -1.95 -11.10 360 246 2324.33 2326.09 3.86 23.45 7.216 6.656 7.043 6.704 0.130 0.138 0.133 -1.56 -11.28 362 248 2326.68 2328.37 2.35 23.58 7.231 6.660 7.056 6.708 0.109 0.118 0.112 -1.32 -11.40 364 250 2329.74 2330.89 3.06 23.96 7.241 6.664 7.065 6.712 0.073 0.069 0.071 -1.86 -11.72 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 366 252 2333.44 2333.44 3.70 24.35 7.260 6.666 7.080 6.714 0.045 0.040 0.043 -1.88 -11.92 368 254 2337.22 2337.22 3.78 24.67 7.282 6.668 7.098 6.716 0.000 0.000 0.000 -1.91 -12.07 370 256 2340.92 2340.92 3.69 24.85 7.308 6.669 7.117 6.717 0.000 0.000 0.000 -1.82 -12.17 372 258 2344.42 2344.42 3.50 25.01 7.335 6.671 7.138 6.719 0.000 0.000 0.000 -1.10 -12.25 374 260 2344.59 2344.59 0.18 25.39 7.357 6.691 7.160 6.739 0.000 0.000 0.000 -0.13 -12.45 376 262 2344.81 2344.81 0.21 25.78 7.378 6.712 7.183 6.759 0.000 0.000 0.000 -0.15 -12.65 378 264 2345.05 2345.05 0.24 26.06 7.399 6.732 7.205 6.780 0.000 0.000 0.000 -0.16 -12.85 380 266 2345.81 2346.82 0.76 26.19 7.431 6.754 7.235 6.801 0.072 0.084 0.076 -0.49 -12.89 382 268 2347.22 2349.19 1.40 26.72 7.618 6.976 7.432 7.021 0.435 0.431 0.434 -0.93 -13.10 384 270 2349.00 2350.96 1.78 27.17 7.641 6.989 7.453 7.035 0.435 0.431 0.434 -0.88 -13.28 386 272 2350.68 2352.62 1.69 27.56 7.663 7.003 7.474 7.049 0.435 0.431 0.434 -0.82 -13.47 388 274 2352.21 2354.09 1.53 27.96 7.683 7.017 7.493 7.062 0.433 0.429 0.432 -0.72 -13.66 390 276 2353.48 2355.31 1.27 28.36 7.696 7.024 7.506 7.069 0.425 0.421 0.424 -0.59 -13.87 392 278 2354.62 2356.27 1.14 28.69 7.675 6.998 7.485 7.044 0.377 0.369 0.374 -0.69 -14.07 394 280 2355.85 2357.42 1.23 28.21 7.693 7.008 7.501 7.053 0.372 0.364 0.370 -0.56 -14.25 396 282 2357.30 2358.60 1.45 28.49 7.656 6.928 7.453 6.974 0.231 0.259 0.239 -0.72 -13.98 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 398 284 2358.69 2360.04 1.39 28.80 7.680 6.945 7.477 6.991 0.241 0.267 0.248 -0.70 -14.13 400 286 2360.05 2361.36 1.35 29.13 7.705 6.961 7.500 7.007 0.249 0.273 0.256 -0.68 -14.28 402 288 2361.35 2362.59 1.30 29.46 7.728 6.975 7.522 7.021 0.255 0.278 0.262 -0.63 -14.44 404 290 2362.52 2363.70 1.17 29.81 7.751 6.990 7.544 7.035 0.260 0.283 0.266 -0.53 -14.60 406 292 2363.43 2364.54 0.91 30.21 7.773 7.007 7.566 7.053 0.265 0.288 0.271 -0.33 -14.79 408 294 2363.86 2365.10 0.43 30.50 7.797 7.019 7.587 7.064 0.268 0.290 0.274 -0.20 -14.94 410 296 2364.17 2365.50 0.32 30.78 7.820 7.030 7.608 7.075 0.270 0.290 0.275 -0.17 -15.09 412 298 2364.46 2365.83 0.28 31.10 7.842 7.042 7.629 7.087 0.271 0.290 0.276 -0.15 -15.26 414 300 2364.72 2366.09 0.27 31.45 7.862 7.055 7.648 7.100 0.271 0.289 0.276 -0.14 -15.44 416 302 2364.98 2366.26 0.25 31.83 7.883 7.067 7.668 7.112 0.271 0.288 0.276 -0.12 -15.62 418 304 2365.15 2366.21 0.18 50.86 7.902 7.081 7.687 7.126 0.271 0.288 0.276 0.09 -15.81 σ Z = 116 (Lv) 282 166 2004.31 2007.11 0.83 6.347 6.201 6.287 6.252 0.199 0.201 0.200 -7.65 0.13 284 168 2019.48 2022.18 15.17 1.49 6.362 6.207 6.299 6.258 0.181 0.185 0.183 -7.58 -0.19 286 170 2034.42 2037.11 14.94 2.64 6.380 6.215 6.314 6.267 0.170 0.176 0.172 -7.29 -0.63 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 288 172 2048.51 2051.31 14.09 3.39 6.403 6.225 6.332 6.277 0.164 0.172 0.167 -6.87 -0.96 290 174 2061.97 2064.50 13.46 3.76 6.415 6.227 6.340 6.278 0.145 0.158 0.150 -6.32 -1.29 292 176 2074.20 2076.19 12.23 4.46 6.418 6.220 6.340 6.271 0.100 0.105 0.102 -6.51 -1.88 294 178 2087.33 2088.60 13.13 5.59 6.432 6.225 6.351 6.276 0.067 0.066 0.067 -6.38 -2.48 296 180 2099.74 2099.74 12.41 6.26 6.447 6.227 6.362 6.278 0.034 0.033 0.033 -6.26 -2.79 298 182 2112.17 2112.17 12.42 6.76 6.467 6.232 6.377 6.283 0.000 0.000 0.000 -6.16 -3.03 300 184 2124.10 2124.10 11.93 7.17 6.488 6.236 6.392 6.287 0.000 0.000 0.000 -5.37 -3.24 302 186 2133.63 2133.63 9.53 7.81 6.514 6.258 6.417 6.309 0.000 0.000 0.000 -4.77 -3.56 304 188 2143.03 2143.03 9.40 8.45 6.540 6.279 6.442 6.330 0.000 0.000 0.000 -4.72 -3.86 306 190 2153.03 2155.66 9.99 8.87 6.789 6.548 6.698 6.597 0.481 0.493 0.485 -5.17 -4.17 308 192 2163.29 2165.84 10.26 9.28 6.799 6.546 6.705 6.595 0.464 0.474 0.468 -5.15 -4.36 310 194 2173.47 2175.94 10.18 9.76 6.815 6.550 6.717 6.599 0.454 0.462 0.457 -5.02 -4.59 312 196 2183.27 2185.57 9.80 10.12 6.810 6.539 6.710 6.587 0.421 0.427 0.423 -4.92 -4.77 314 198 2192.82 2195.04 9.55 10.60 6.818 6.537 6.715 6.586 0.402 0.408 0.404 -4.67 -5.01 316 200 2201.85 2204.15 9.03 11.12 6.834 6.544 6.729 6.593 0.394 0.398 0.396 -4.44 -5.26 318 202 2210.56 2212.92 8.71 11.66 6.859 6.560 6.751 6.609 0.394 0.398 0.395 -4.32 -5.52 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 320 204 2219.07 2221.43 8.51 12.05 6.885 6.578 6.775 6.626 0.396 0.399 0.397 -4.22 -5.79 322 206 2227.65 2229.44 8.58 12.36 6.829 6.507 6.715 6.556 0.284 0.295 0.288 -4.33 -5.88 324 208 2236.18 2237.89 8.53 12.80 6.843 6.510 6.726 6.559 0.269 0.283 0.274 -4.25 -6.11 326 210 2244.52 2246.19 8.35 13.38 6.861 6.519 6.741 6.568 0.261 0.277 0.267 -4.13 -6.37 328 212 2252.60 2254.22 8.07 13.95 6.883 6.532 6.761 6.581 0.261 0.278 0.267 -3.97 -6.65 330 214 2260.33 2261.97 7.74 14.44 6.908 6.546 6.783 6.595 0.265 0.282 0.271 -3.82 -6.90 332 216 2267.81 2269.47 7.47 14.93 6.932 6.559 6.804 6.608 0.269 0.285 0.275 -3.70 -7.14 334 218 2275.06 2276.74 7.25 15.45 6.955 6.571 6.824 6.620 0.271 0.286 0.277 -3.57 -7.40 336 220 2282.02 2283.60 6.96 16.12 6.977 6.585 6.844 6.634 0.273 0.287 0.278 -3.22 -7.72 338 222 2288.05 2289.67 6.03 16.75 6.991 6.595 6.858 6.643 0.258 0.271 0.263 -3.01 -8.07 340 224 2293.88 2295.57 5.83 17.27 7.011 6.604 6.875 6.652 0.251 0.262 0.255 -2.89 -8.35 342 226 2299.55 2301.37 5.67 17.73 7.030 6.611 6.891 6.659 0.244 0.253 0.247 -2.85 -8.59 344 228 2305.22 2307.11 5.66 18.19 7.048 6.618 6.906 6.666 0.237 0.243 0.239 -2.86 -8.82 346 230 2310.92 2312.80 5.70 18.63 7.067 6.625 6.922 6.673 0.230 0.235 0.232 -2.86 -9.04 348 232 2316.60 2318.32 5.68 19.04 7.089 6.633 6.940 6.681 0.227 0.230 0.228 -2.48 -9.22 350 234 2320.74 2322.67 4.14 19.44 7.107 6.639 6.955 6.687 0.214 0.218 0.215 -2.09 -9.40 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 352 236 2324.86 2326.95 4.12 19.84 7.124 6.645 6.970 6.693 0.201 0.205 0.202 -2.09 -9.57 354 238 2329.00 2331.15 4.14 20.21 7.139 6.651 6.983 6.699 0.186 0.190 0.188 -2.11 -9.74 356 240 2333.22 2335.27 4.22 20.55 7.153 6.658 6.996 6.706 0.169 0.173 0.170 -2.15 -9.90 358 242 2337.45 2339.49 4.23 20.87 7.171 6.663 7.010 6.710 0.155 0.160 0.156 -2.12 -10.05 360 244 2341.66 2343.64 4.21 21.19 7.189 6.666 7.024 6.713 0.140 0.147 0.142 -2.12 -10.21 362 246 2345.86 2347.69 4.21 21.53 7.209 6.669 7.041 6.717 0.129 0.137 0.132 -1.74 -10.38 364 248 2348.66 2350.29 2.79 21.98 7.221 6.671 7.050 6.719 0.103 0.105 0.103 -1.66 -10.68 366 250 2352.55 2353.54 3.89 22.80 7.230 6.675 7.059 6.722 0.060 0.052 0.057 -2.09 -11.14 368 252 2356.65 2356.65 4.10 23.21 7.250 6.677 7.074 6.725 0.020 0.017 0.019 -2.10 -11.35 370 254 2360.74 2360.74 4.08 23.51 7.273 6.680 7.093 6.727 0.000 0.000 0.000 -2.01 -11.48 372 256 2364.61 2364.61 3.87 23.70 7.299 6.681 7.112 6.729 0.000 0.000 0.000 -1.90 -11.57 374 258 2368.28 2368.28 3.67 23.86 7.326 6.683 7.133 6.730 0.000 0.000 0.000 -1.24 -11.66 376 260 2368.88 2368.88 0.60 24.28 7.347 6.704 7.155 6.751 0.000 0.000 0.000 -0.33 -11.86 378 262 2369.49 2369.49 0.61 24.68 7.368 6.724 7.177 6.772 0.000 0.000 0.000 -0.35 -12.07 380 264 2370.11 2370.11 0.62 25.07 7.390 6.745 7.199 6.793 0.014 0.018 0.015 -0.38 -12.26 382 266 2371.03 2372.16 0.92 25.22 7.417 6.768 7.226 6.815 0.056 0.067 0.060 -0.56 -12.38 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 384 268 2372.75 2374.77 1.72 25.53 7.609 6.995 7.429 7.041 0.434 0.431 0.433 -1.09 -12.49 386 270 2374.87 2376.89 2.13 25.88 7.631 7.007 7.449 7.053 0.432 0.430 0.431 -1.06 -12.66 388 272 2376.93 2378.91 2.05 26.24 7.653 7.020 7.469 7.065 0.431 0.428 0.430 -1.01 -12.84 390 274 2378.86 2380.77 1.93 26.65 7.672 7.032 7.488 7.078 0.429 0.425 0.428 -0.93 -13.04 392 276 2380.57 2382.39 1.71 27.09 7.689 7.043 7.503 7.088 0.423 0.419 0.422 -0.78 -13.24 394 278 2382.16 2383.79 1.59 27.54 7.663 7.011 7.477 7.056 0.370 0.359 0.367 -0.87 -13.49 396 280 2383.75 2385.26 1.59 27.89 7.683 7.023 7.496 7.068 0.370 0.359 0.366 -0.70 -13.66 398 282 2384.96 2386.50 1.21 27.66 7.695 7.022 7.505 7.067 0.352 0.345 0.350 -0.63 -13.76 400 284 2386.33 2387.69 1.37 27.64 7.667 6.961 7.469 7.007 0.238 0.261 0.244 -0.85 -13.57 402 286 2387.99 2389.32 1.66 27.94 7.692 6.977 7.493 7.023 0.246 0.268 0.253 -0.83 -13.72 404 288 2389.59 2390.87 1.60 28.24 7.716 6.991 7.515 7.036 0.252 0.274 0.259 -0.78 -13.86 406 290 2391.08 2392.30 1.49 28.56 7.739 7.005 7.537 7.050 0.257 0.279 0.263 -0.71 -14.01 408 292 2392.37 2393.45 1.29 28.94 7.761 7.021 7.558 7.066 0.261 0.284 0.268 -0.50 -14.18 410 294 2393.10 2394.36 0.74 29.25 7.783 7.033 7.579 7.079 0.263 0.285 0.269 -0.35 -14.35 412 296 2393.74 2395.12 0.64 29.57 7.805 7.046 7.599 7.091 0.265 0.285 0.270 -0.33 -14.52 414 298 2394.37 2395.79 0.63 29.92 7.827 7.059 7.619 7.104 0.266 0.285 0.271 -0.33 -14.69 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 416 300 2395.00 2396.38 0.62 30.27 7.848 7.071 7.639 7.116 0.267 0.285 0.272 -0.32 -14.86 418 302 2395.60 2396.89 0.60 30.62 7.869 7.083 7.659 7.128 0.268 0.285 0.272 -0.29 -15.03 420 304 2396.13 2397.19 0.53 30.98 7.891 7.094 7.679 7.139 0.268 0.285 0.273 -0.06 -15.19 422 306 2395.83 2397.10 -0.30 31.24 7.911 7.103 7.698 7.148 0.265 0.282 0.270 0.16 -15.35 σ Z = 118 (Og) 288 170 2033.16 2034.78 14.41 -1.26 6.356 6.209 6.296 6.260 0.105 0.100 0.103 -7.80 -0.11 290 172 2049.52 2049.52 16.36 1.01 6.371 6.220 6.310 6.271 0.000 0.000 0.000 -7.73 -1.22 292 174 2063.80 2063.80 14.28 1.83 6.390 6.225 6.324 6.277 0.012 0.012 0.012 -7.09 -1.42 294 176 2077.83 2077.83 14.02 3.63 6.410 6.232 6.339 6.283 0.048 0.045 0.047 -6.98 -1.51 296 178 2091.55 2092.64 13.72 4.22 6.432 6.239 6.356 6.290 0.059 0.055 0.057 -6.68 -1.67 298 180 2104.53 2104.53 12.98 4.78 6.449 6.243 6.368 6.294 0.000 0.000 0.000 -6.59 -2.08 300 182 2117.47 2117.47 12.94 5.30 6.469 6.248 6.383 6.299 0.000 0.000 0.000 -6.38 -2.30 302 184 2129.81 2129.81 12.34 5.71 6.489 6.253 6.398 6.304 0.000 0.000 0.000 -5.65 -2.51 304 186 2139.97 2139.97 10.15 6.34 6.515 6.274 6.423 6.325 0.000 0.000 0.000 -5.08 -2.82 306 188 2150.46 2152.52 10.49 7.43 6.824 6.615 6.744 6.664 0.554 0.568 0.559 -5.32 -3.81 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 308 190 2161.22 2163.83 10.77 8.20 6.846 6.631 6.764 6.679 0.552 0.569 0.558 -5.19 -3.87 310 192 2171.41 2174.03 10.19 8.12 6.860 6.635 6.776 6.683 0.542 0.559 0.548 -5.10 -4.09 312 194 2181.98 2184.48 10.56 8.51 6.824 6.580 6.732 6.628 0.462 0.477 0.468 -5.26 -3.97 314 196 2192.20 2194.73 10.22 8.93 6.836 6.583 6.742 6.632 0.449 0.461 0.453 -5.02 -4.20 316 198 2202.18 2204.47 9.98 9.36 6.826 6.565 6.730 6.613 0.410 0.417 0.413 -4.89 -4.41 318 200 2211.68 2214.00 9.50 9.83 6.835 6.564 6.736 6.612 0.392 0.397 0.394 -4.70 -4.64 320 202 2220.92 2223.27 9.24 10.36 6.857 6.577 6.755 6.625 0.388 0.391 0.389 -4.59 -4.91 322 204 2229.75 2231.81 8.83 10.68 6.830 6.539 6.724 6.587 0.320 0.322 0.320 -4.63 -5.13 324 206 2238.86 2240.84 9.12 11.22 6.841 6.541 6.734 6.590 0.303 0.307 0.304 -4.55 -5.35 326 208 2247.81 2249.68 8.94 11.63 6.853 6.543 6.743 6.592 0.286 0.294 0.289 -4.46 -5.56 328 210 2256.59 2258.33 8.79 12.07 6.865 6.543 6.751 6.592 0.268 0.280 0.272 -4.38 -5.75 330 212 2265.18 2266.80 8.58 12.58 6.882 6.550 6.765 6.598 0.259 0.274 0.265 -4.22 -5.98 332 214 2273.41 2275.07 8.23 13.07 6.906 6.563 6.786 6.611 0.262 0.277 0.267 -4.06 -6.23 334 216 2281.38 2283.12 7.97 13.58 6.929 6.575 6.806 6.624 0.265 0.279 0.270 -3.95 -6.49 336 218 2289.17 2290.92 7.79 14.11 6.952 6.588 6.826 6.636 0.267 0.281 0.272 -3.85 -6.76 338 220 2296.73 2298.32 7.56 14.71 6.974 6.601 6.846 6.649 0.269 0.282 0.273 -3.58 -7.04 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 340 222 2303.55 2305.09 6.82 15.49 6.988 6.612 6.860 6.660 0.254 0.266 0.258 -3.33 -7.44 342 224 2309.93 2311.62 6.38 16.04 7.009 6.622 6.878 6.670 0.249 0.260 0.253 -3.15 -7.72 344 226 2316.11 2317.94 6.18 16.56 7.028 6.631 6.894 6.679 0.243 0.253 0.247 -3.10 -7.98 346 228 2322.25 2324.15 6.13 17.03 7.047 6.639 6.910 6.687 0.237 0.246 0.240 -3.08 -8.22 348 230 2328.36 2330.25 6.12 17.45 7.067 6.647 6.927 6.695 0.232 0.240 0.234 -3.05 -8.43 350 232 2334.39 2336.16 6.03 17.80 7.089 6.655 6.946 6.703 0.229 0.236 0.232 -2.66 -8.61 352 234 2338.88 2340.86 4.49 18.14 7.107 6.662 6.961 6.709 0.217 0.224 0.220 -2.26 -8.79 354 236 2343.34 2345.48 4.46 18.48 7.123 6.668 6.975 6.715 0.205 0.212 0.207 -2.25 -8.95 356 238 2347.79 2349.99 4.45 18.79 7.138 6.673 6.988 6.721 0.189 0.197 0.192 -2.26 -9.10 358 240 2352.34 2354.39 4.54 19.11 7.151 6.678 6.999 6.726 0.170 0.176 0.172 -2.30 -9.27 360 242 2356.85 2358.90 4.52 19.40 7.167 6.680 7.011 6.728 0.155 0.161 0.157 -2.27 -9.41 362 244 2361.36 2363.32 4.51 19.71 7.183 6.681 7.023 6.728 0.138 0.144 0.140 -2.28 -9.57 364 246 2365.89 2367.73 4.52 20.02 7.203 6.683 7.039 6.731 0.128 0.134 0.130 -1.93 -9.72 366 248 2369.58 2370.57 3.69 20.92 7.200 6.682 7.037 6.729 0.062 0.052 0.059 -2.36 -10.30 368 250 2374.17 2374.17 4.59 21.62 7.220 6.684 7.053 6.732 0.040 0.032 0.037 -2.30 -10.52 370 252 2378.72 2378.72 4.56 22.07 7.241 6.688 7.070 6.736 0.000 0.000 0.000 -2.25 -10.72 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 372 254 2383.03 2383.03 4.31 22.30 7.265 6.691 7.088 6.738 0.000 0.000 0.000 -2.10 -10.83 374 256 2387.09 2387.09 4.06 22.48 7.291 6.692 7.107 6.740 0.000 0.000 0.000 -1.99 -10.93 376 258 2390.93 2390.93 3.84 22.65 7.317 6.694 7.128 6.742 0.000 0.000 0.000 -1.38 -11.01 378 260 2391.94 2391.94 1.01 23.06 7.338 6.715 7.150 6.763 0.000 0.000 0.000 -0.54 -11.22 380 262 2392.96 2392.96 1.02 23.47 7.360 6.736 7.172 6.783 0.000 0.000 0.000 -0.55 -11.43 382 264 2393.99 2393.99 1.04 23.88 7.381 6.757 7.194 6.804 0.000 0.000 0.000 -0.56 -11.63 384 266 2395.15 2395.15 1.16 24.12 7.406 6.780 7.219 6.827 0.043 0.052 0.046 -0.68 -11.78 386 268 2397.10 2399.17 1.95 24.35 7.600 7.013 7.425 7.059 0.430 0.430 0.430 -1.26 -11.93 388 270 2399.56 2401.62 2.46 24.69 7.620 7.023 7.443 7.068 0.426 0.425 0.425 -1.24 -12.10 390 272 2401.98 2404.00 2.41 25.05 7.640 7.034 7.462 7.079 0.423 0.421 0.423 -1.20 -12.28 392 274 2404.31 2406.25 2.33 25.44 7.661 7.047 7.482 7.092 0.423 0.419 0.422 -1.13 -12.47 394 276 2406.38 2408.08 2.07 25.81 7.629 7.011 7.450 7.056 0.362 0.350 0.359 -1.11 -12.74 396 278 2408.52 2410.15 2.14 26.36 7.653 7.025 7.471 7.070 0.366 0.353 0.362 -1.04 -12.90 398 280 2410.44 2411.93 1.92 26.70 7.674 7.038 7.491 7.083 0.367 0.354 0.363 -0.85 -13.06 400 282 2411.88 2413.44 1.44 26.92 7.688 7.041 7.503 7.086 0.355 0.344 0.352 -0.71 -13.18 402 284 2413.23 2414.78 1.35 26.90 7.697 7.036 7.509 7.081 0.331 0.327 0.330 -0.75 -13.25 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 404 286 2414.84 2416.19 1.61 26.85 7.681 6.994 7.487 7.040 0.246 0.265 0.251 -0.97 -13.18 406 288 2416.71 2418.04 1.87 27.12 7.704 7.007 7.508 7.053 0.251 0.269 0.256 -0.92 -13.31 408 290 2418.49 2419.74 1.78 27.41 7.727 7.019 7.529 7.065 0.255 0.273 0.260 -0.86 -13.44 410 292 2420.10 2421.18 1.60 27.73 7.749 7.032 7.550 7.078 0.257 0.277 0.263 -0.67 -13.59 412 294 2421.19 2422.44 1.09 28.08 7.770 7.047 7.570 7.092 0.258 0.276 0.263 -0.53 -13.78 414 296 2422.19 2423.55 1.00 28.44 7.790 7.061 7.590 7.106 0.259 0.276 0.264 -0.51 -13.96 416 298 2423.17 2424.57 0.98 28.79 7.812 7.074 7.610 7.119 0.260 0.277 0.265 -0.50 -14.14 418 300 2424.13 2425.50 0.96 29.13 7.834 7.086 7.630 7.131 0.262 0.278 0.266 -0.48 -14.30 420 302 2425.05 2426.33 0.92 29.45 7.856 7.096 7.650 7.141 0.263 0.278 0.267 -0.45 -14.45 422 304 2425.88 2426.93 0.83 29.75 7.879 7.106 7.671 7.151 0.265 0.279 0.269 -0.24 -14.58 424 306 2425.94 2427.23 0.06 30.12 7.898 7.118 7.689 7.163 0.261 0.276 0.265 -0.01 -14.79 426 308 2425.89 2427.28 -0.05 30.44 7.918 7.128 7.707 7.173 0.258 0.273 0.262 0.02 -14.97 σ Z = 120 (120) 290 170 2033.99 2033.99 17.28 0.83 6.353 6.222 6.299 6.274 0.000 0.000 0.000 -8.72 -0.75 292 172 2051.29 2051.29 17.30 1.77 6.374 6.235 6.317 6.286 0.000 0.000 0.000 -8.03 -1.18 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 294 174 2065.98 2065.98 14.70 2.18 6.393 6.241 6.331 6.292 0.000 0.000 0.000 -7.29 -0.10 296 176 2080.28 2080.28 14.30 2.45 6.412 6.247 6.346 6.298 0.000 0.000 0.000 -7.11 -0.36 298 178 2094.26 2094.26 13.98 2.71 6.432 6.253 6.360 6.304 0.000 0.000 0.000 -6.96 -0.70 300 180 2107.95 2107.95 13.69 3.42 6.451 6.259 6.375 6.310 0.000 0.000 0.000 -6.80 -1.01 302 182 2121.31 2121.31 13.36 3.84 6.471 6.265 6.390 6.316 0.000 0.000 0.000 -6.59 -1.31 304 184 2133.99 2133.99 12.68 4.18 6.491 6.269 6.404 6.320 0.000 0.000 0.000 -5.85 -1.65 306 186 2146.19 2148.42 12.20 6.22 6.814 6.639 6.746 6.687 0.565 0.587 0.574 -5.97 -2.35 308 188 2157.44 2159.91 11.25 6.99 6.841 6.656 6.769 6.704 0.569 0.590 0.577 -5.58 -2.65 310 190 2168.40 2171.00 10.96 7.18 6.869 6.675 6.794 6.722 0.576 0.594 0.583 -5.45 -2.96 312 192 2179.10 2181.71 10.70 7.69 6.893 6.689 6.816 6.737 0.578 0.595 0.584 -5.32 -3.25 314 194 2189.54 2192.15 10.44 7.57 6.912 6.699 6.831 6.746 0.573 0.592 0.580 -5.20 -3.54 316 196 2199.96 2202.52 10.42 7.77 6.849 6.615 6.761 6.663 0.461 0.479 0.468 -5.23 -3.59 318 198 2210.35 2212.67 10.38 8.17 6.832 6.590 6.742 6.639 0.415 0.426 0.419 -5.13 -3.82 320 200 2220.31 2222.63 9.96 8.63 6.838 6.585 6.744 6.633 0.392 0.398 0.394 -4.95 -4.05 322 202 2230.07 2232.39 9.76 9.15 6.855 6.593 6.758 6.641 0.382 0.385 0.383 -4.85 -4.30 324 204 2239.59 2241.92 9.52 9.84 6.880 6.608 6.780 6.656 0.383 0.384 0.384 -4.70 -4.54 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 326 206 2248.94 2250.93 9.35 10.08 6.850 6.569 6.748 6.617 0.313 0.314 0.313 -4.77 -4.71 328 208 2258.29 2260.18 9.35 10.48 6.862 6.570 6.756 6.619 0.297 0.301 0.299 -4.65 -4.90 330 210 2267.43 2269.22 9.14 10.84 6.872 6.569 6.763 6.618 0.278 0.287 0.281 -4.57 -5.08 332 212 2276.41 2278.07 8.98 11.24 6.883 6.569 6.771 6.617 0.261 0.273 0.265 -4.46 -5.29 334 214 2285.14 2286.84 8.72 11.73 6.905 6.579 6.790 6.628 0.260 0.272 0.264 -4.32 -5.52 336 216 2293.64 2295.41 8.50 12.25 6.927 6.592 6.809 6.640 0.262 0.273 0.266 -4.22 -5.78 338 218 2301.96 2303.73 8.33 12.79 6.949 6.604 6.828 6.652 0.263 0.274 0.267 -4.13 -6.04 340 220 2310.06 2311.69 8.10 13.33 6.970 6.615 6.847 6.663 0.262 0.273 0.266 -3.94 -6.32 342 222 2317.70 2319.18 7.63 14.15 6.986 6.628 6.863 6.676 0.251 0.262 0.255 -3.66 -6.68 344 224 2324.66 2326.34 6.96 14.73 7.007 6.640 6.881 6.688 0.248 0.259 0.251 -3.43 -6.99 346 226 2331.39 2333.22 6.74 15.28 7.027 6.650 6.899 6.698 0.243 0.254 0.247 -3.36 -7.28 348 228 2338.02 2339.92 6.63 15.78 7.047 6.659 6.916 6.707 0.238 0.249 0.242 -3.32 -7.55 350 230 2344.58 2346.47 6.56 16.22 7.067 6.668 6.933 6.715 0.233 0.244 0.237 -3.26 -7.79 352 232 2350.98 2352.78 6.40 16.59 7.090 6.676 6.952 6.724 0.232 0.242 0.235 -2.87 -7.99 354 234 2355.84 2357.85 4.86 16.95 7.107 6.684 6.967 6.732 0.221 0.232 0.225 -2.43 -8.18 356 236 2360.62 2362.79 4.79 17.28 7.124 6.691 6.981 6.739 0.208 0.220 0.212 -2.41 -8.36 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 358 238 2365.38 2367.57 4.75 17.59 7.138 6.696 6.993 6.743 0.192 0.202 0.195 -2.42 -8.51 360 240 2370.24 2372.27 4.86 17.90 7.149 6.698 7.002 6.746 0.170 0.179 0.173 -2.45 -8.68 362 242 2375.03 2377.03 4.79 18.18 7.163 6.697 7.012 6.745 0.153 0.159 0.155 -2.42 -8.83 364 244 2379.85 2381.74 4.82 18.49 7.178 6.696 7.023 6.743 0.135 0.139 0.136 -2.42 -8.99 366 246 2384.65 2386.49 4.80 18.77 7.199 6.699 7.039 6.746 0.126 0.131 0.128 -1.93 -9.12 368 248 2389.44 2389.44 4.79 19.87 7.190 6.691 7.031 6.739 0.000 0.000 0.000 -2.59 -9.57 370 250 2394.53 2394.53 5.08 20.36 7.212 6.695 7.049 6.742 0.000 0.000 0.000 -2.52 -9.71 372 252 2399.43 2399.43 4.90 20.71 7.234 6.699 7.066 6.746 0.000 0.000 0.000 -2.38 -9.84 374 254 2403.95 2403.95 4.52 20.91 7.258 6.701 7.084 6.749 0.000 0.000 0.000 -2.20 -9.96 376 256 2408.18 2408.18 4.23 21.09 7.283 6.703 7.103 6.751 0.000 0.000 0.000 -2.08 -10.07 378 258 2412.19 2412.19 4.02 21.27 7.309 6.705 7.123 6.753 0.000 0.000 0.000 -1.52 -10.20 380 260 2413.62 2413.62 1.43 21.68 7.330 6.727 7.145 6.774 0.000 0.000 0.000 -0.75 -10.43 382 262 2415.05 2415.05 1.43 22.09 7.352 6.748 7.167 6.795 0.000 0.000 0.000 -0.76 -10.65 384 264 2416.50 2416.50 1.45 22.50 7.373 6.769 7.189 6.816 0.000 0.000 0.000 -0.77 -10.88 386 266 2417.99 2417.99 1.49 22.84 7.397 6.793 7.214 6.840 0.034 0.040 0.036 -0.85 -11.11 388 268 2420.37 2422.44 2.38 23.27 7.582 7.021 7.413 7.067 0.415 0.414 0.414 -1.44 -11.43 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 390 270 2423.20 2424.93 2.83 23.64 7.551 6.985 7.382 7.030 0.348 0.339 0.345 -1.45 -11.66 392 272 2426.01 2427.72 2.80 24.03 7.573 6.998 7.402 7.044 0.349 0.340 0.346 -1.38 -11.83 394 274 2428.68 2430.41 2.67 24.37 7.597 7.013 7.424 7.058 0.353 0.343 0.350 -1.32 -11.99 396 276 2431.24 2432.97 2.56 24.87 7.622 7.027 7.446 7.073 0.359 0.347 0.355 -1.27 -12.15 398 278 2433.70 2435.35 2.46 25.18 7.645 7.042 7.468 7.087 0.364 0.350 0.360 -1.20 -12.31 400 280 2435.95 2437.43 2.25 25.51 7.667 7.054 7.488 7.099 0.366 0.352 0.362 -1.00 -12.46 402 282 2437.65 2439.27 1.70 25.77 7.683 7.062 7.503 7.107 0.357 0.344 0.353 -0.82 -12.60 404 284 2439.18 2440.85 1.53 25.95 7.696 7.063 7.513 7.109 0.342 0.333 0.340 -0.80 -12.71 406 286 2440.74 2442.27 1.55 25.90 7.695 7.049 7.510 7.094 0.306 0.305 0.306 -0.92 -12.72 408 288 2442.72 2444.08 1.98 26.01 7.694 7.024 7.503 7.070 0.252 0.266 0.256 -1.05 -12.74 410 290 2444.76 2446.02 2.04 26.26 7.716 7.034 7.522 7.079 0.252 0.267 0.256 -1.00 -12.86 412 292 2446.63 2447.75 1.87 26.54 7.737 7.044 7.542 7.090 0.253 0.269 0.257 -0.84 -13.00 414 294 2448.13 2449.36 1.49 26.94 7.757 7.060 7.561 7.105 0.252 0.268 0.257 -0.72 -13.19 416 296 2449.51 2450.84 1.38 27.32 7.777 7.075 7.581 7.120 0.253 0.268 0.258 -0.69 -13.37 418 298 2450.84 2452.21 1.33 27.67 7.799 7.088 7.602 7.133 0.255 0.269 0.259 -0.67 -13.54 420 300 2452.12 2453.46 1.28 27.99 7.821 7.099 7.622 7.144 0.257 0.270 0.260 -0.64 -13.70 (Continued on next page)

A N E^{cal}_b E^{cal}_{b+rot} E^{exp}_b S_{2n} S_{2p} R_n R_p R_m R^{cal}_{ch} R^{exp}_{ch} β_{2n} β_{2p} β_2 λ_n λ_p (MeV) (MeV) (MeV) (MeV) (MeV) (fm) (fm) (fm) (fm) (fm) (MeV) (MeV) 422 302 2453.34 2454.60 1.22 28.28 7.844 7.110 7.642 7.154 0.258 0.271 0.262 -0.59 -13.84 424 304 2454.41 2455.52 1.07 28.53 7.867 7.119 7.663 7.164 0.260 0.272 0.264 -0.42 -13.97 426 306 2454.96 2456.24 0.55 29.01 7.885 7.134 7.681 7.178 0.258 0.270 0.261 -0.21 -14.21 428 308 2455.27 2456.65 0.32 29.38 7.905 7.145 7.699 7.189 0.254 0.267 0.257 -0.15 -14.41 430 310 2455.51 2456.93 0.24 29.72 7.924 7.155 7.717 7.199 0.249 0.262 0.252 -0.13 -14.59 432 312 2455.73 2457.16 0.22 30.07 7.942 7.164 7.734 7.209 0.243 0.256 0.246 -0.12 -14.77 434 314 2455.95 2457.36 0.21 30.40 7.961 7.173 7.751 7.217 0.237 0.251 0.241 -0.11 -14.93 436 316 2456.13 2457.50 0.19 30.68 7.982 7.180 7.769 7.224 0.232 0.247 0.236 -0.09 -15.07 438 318 2456.25 2457.55 0.12 30.94 8.002 7.187 7.788 7.232 0.228 0.243 0.232 -0.01 -15.21 440 320 2456.11 2457.43 -0.14 31.37 8.018 7.201 7.804 7.245 0.222 0.236 0.226 0.19 -15.43 σ

(End)

[1] W. Zhan, H. Xu, G. Xiao, J. Xia, H. Zhao, and Y. Yuan, Nucl. Phys. A 834, 694c (2010). [2] T. Motobayashi, Nucl. Phys. A 834, 707c (2010).

[3] K. Tshoo, Y. Kim, Y. Kwon, H. Woo, G. Kim, Y. Kim, B. Kang, S. Park, Y.-H. Park, J. Yoon, J. Kim, J. Lee, C. Seo, W. Hwang, C. Yun, D. Jeon, and S. Kim, Nucl. Instrum. Methods Phys. Res. B 317, 242 (2013).

[4] C. Sturm, B. Sharkov, and H. Stcker, Nucl. Phys. A 834, 682c (2010). [5] S. Gales, Nucl. Phys. A 834, 717c (2010). [6] M. Thoennessen, Nucl. Phys. A 834, 688c (2010).

[7] T. Baumann, A. Spyrou, and M. Thoennessen, Rep. Prog. Phys. 75, 036301 (2012). [8] A. Aprahamian, K. Langanke, and M. Wiescher, Prog. Part. Nucl. Phys. 54, 535 (2005). [9] H. Schatz, Int. J. Mass Spectrometry 349-350, 181 (2013). [10] M. Thoennessen, The Discovery of Isotopes (Springer, New York, 2016). [11] “Discovery of Nuclides Project,” (2021).

[12] F. Kondev, M. Wang, W. Huang, S. Naimi, and G. Audi, Chin. Phys. C 45, 030001 (2021). [13] W. Huang, M. Wang, F. Kondev, G. Audi, and S. Naimi, Chin. Phys. C 45, 030002 (2021). [14] M. Wang, W. Huang, F. Kondev, G. Audi, and S. Naimi, Chin. Phys. C 45, 030003 (2021). [15] D. Lunney, J. Pearson, and C. Thibault, Rev. Mod. Phys. 75, 1021 (2003). [16] K. Blaum, Phys. Rep. 425, 1 (2006).

[17] Z. Y. Zhang, Z. G. Gan, H. B. Yang, L. Ma, M. H. Huang, C. L. Yang, M. M. Zhang, Y. L.

Tian, Y. S. Wang, M. D. Sun, H. Y. Lu, W. Q. Zhang, H. B. Zhou, X. Wang, C. G. Wu, L. M. Duan, W. X. Huang, Z. Liu, Z. Z. Ren, S. G. Zhou, X. H. Zhou, H. S. Xu, Y. S. Tsyganov, A. A. Voinov, and A. N. Polyakov, Phys. Rev. Lett. 122, 192503 (2019).

[18] D. S. Ahn, N. Fukuda, H. Geissel, N. Inabe, N. Iwasa, T. Kubo, K. Kusaka, D. J. Morrissey, D. Murai, T. Nakamura, M. Ohtake, H. Otsu, H. Sato, B. M. Sherrill, Y. Shimizu, H. Suzuki, H. Takeda, O. B. Tarasov, H. Ueno, Y. Yanagisawa, and K. Yoshida, Phys. Rev. Lett. 123, 212501 (2019).

[19] Z. Niu, H. Liang, B. Sun, Y. Niu, J. Guo, and J. Meng, Sci. Bull. 63, 759 (2018). [20] P. Möller, A. Sierk, T. Ichikawa, and H. Sagawa, Atom. Data Nucl. Data Tabl. 109-110, 1 (2016).

[21] Y. Aboussir, J. Pearson, A. Dutta, and F. Tondeur, Atom. Data Nucl. Data Tabl. 61, 127 (1995).

[22] N. Wang, M. Liu, X. Wu, and J. Meng, Phys. Lett. B 734, 215 (2014). [23] H. Zhang, J. Dong, N. Ma, G. Royer, J. Li, and H. Zhang, Nucl. Phys. A 929, 38 (2014). [24] M. Samyn, S. Goriely, P.-H. Heenen, J. Pearson, and F. Tondeur, Nucl. Phys. A 700, 142 (2002).

[25] M. V. Stoitsov, J. Dobaczewski, W. Nazarewicz, S. Pittel, and D. J. Dean, Phys. Rev. C 68, 054312 (2003).

[26] S. Goriely, N. Chamel, and J. M. Pearson, Phys. Rev. Lett. 102, 152503 (2009). [27] J. Erler, N. Birge, M. Kortelainen, W. Nazarewicz, E. Olsen, A. M. Perhac, and M. Stoitsov, Nature 486, 509 (2012).

[28] S. Goriely, N. Chamel, and J. M. Pearson, Phys. Rev. C 88, 024308 (2013). [29] S. Goriely, N. Chamel, and J. M. Pearson, Phys. Rev. C 88, 061302(R) (2013). [30] S. Hilaire and M. Girod, Eur. Phys. J. A 33, 237 (2007).

[31] S. Goriely, S. Hilaire, M. Girod, and S. Péru, Phys. Rev. Lett. 102, 242501 (2009). [32] J. P. Delaroche, M. Girod, J. Libert, H. Goutte, S. Hilaire, S. Péru, N. Pillet, and G. F.

Bertsch, Phys. Rev. C 81, 014303 (2010). [33] P. Ring, Prog. Part. Nucl. Phys. 37, 193 (1996).

[34] D. Vretenar, A. V. Afanasjev, G. A. Lalazissis, and P. Ring, Phys. Rep. 409, 101 (2005). [35] J. Meng, H. Toki, S. G. Zhou, S. Q. Zhang, W. H. Long, and L. S. Geng, Prog. Part. Nucl.

Phys. 57, 470 (2006).

[36] T. Niksic, D. Vretenar, and P. Ring, Prog. Part. Nucl. Phys. 66, 519 (2011). [37] J. Meng, J. Peng, S. Q. Zhang, and P. W. Zhao, Front. Phys. 8, 55 (2013). [38] J. Meng and S. G. Zhou, J. Phys. G 42, 093101 (2015). [39] S.-G. Zhou, Phys. Scr. 91, 063008 (2016).

[40] J. Meng, ed., Relativistic Density Functional for Nuclear Structure (World Scientific, 2016). [41] S. Shen, H. Liang, W. H. Long, J. Meng, and P. Ring, Prog. Part. Nucl. Phys. 109, 103713 (2019).

[42] Z. X. Ren and P. W. Zhao, Phys. Rev. C 102, 021301(R) (2020). [43] J. N. Ginocchio, Phys. Rev. Lett. 78, 436 (1997).

[44] J. Meng, K. Sugawara-Tanabe, S. Yamaji, P. Ring, and A. Arima, Phys. Rev. C 58, R628

(1998).

[45] J. Meng, K. Sugawara-Tanabe, S. Yamaji, and A. Arima, Phys. Rev. C 59, 154 (1999). [46] T. S. Chen, H. F. Lu, J. Meng, S. Q. Zhang, and S. G. Zhou, Chin. Phys. Lett. 20, 358 (2003).

[47] J. N. Ginocchio, Phys. Rep. 414, 165 (2005).

[48] H. Liang, J. Meng, and S.-G. Zhou, Phys. Rep. 570, 1 (2015). [49] S.-G. Zhou, J. Meng, and P. Ring, Phys. Rev. Lett. 91, 262501 (2003). [50] X. T. He, S. G. Zhou, J. Meng, E. G. Zhao, and W. Scheid, Eur. Phys. J. A 28, 265 (2006). [51] W. Koepf and P. Ring, Nucl. Phys. A 493, 61 (1989). [52] J. M. Yao, H. Chen, and J. Meng, Phys. Rev. C 74, 024307 (2006). [53] A. Arima, Sci. China Phys. Mech. Astron. 54, 188 (2011).

[54] J. Li, J. Meng, P. Ring, J. M. Yao, and A. Arima, Sci. China Phys. Mech. Astron. 54, 204 (2011).

[55] J. Li, J. M. Yao, J. Meng, and A. Arima, Prog. Theor. Phys. 125, 1185 (2011). [56] J. Li and J. Meng, Front. Phys. 13, 132109 (2018). [57] J. König and P. Ring, Phys. Rev. Lett. 71, 3079 (1993). [58] A. V. Afanasjev, P. Ring, and J. Konig, Nucl. Phys. A 676, 196 (2000). [59] A. V. Afanasjev and P. Ring, Phys. Rev. C 62, 031302(R) (2000). [60] A. V. Afanasjev and H. Abusara, Phys. Rev. C 82, 034329 (2010).

[61] P. W. Zhao, J. Peng, H. Z. Liang, P. Ring, and J. Meng, Phys. Rev. Lett. 107, 122501 (2011).

[62] P. W. Zhao, S. Q. Zhang, J. Peng, H. Z. Liang, P. Ring, and J. Meng, Phys. Lett. B 699, 181 (2011).

[63] P. W. Zhao, J. Peng, H. Z. Liang, P. Ring, and J. Meng, Phys. Rev. C 85, 054310 (2012). [64] P. W. Zhao, N. Itagaki, and J. Meng, Phys. Rev. Lett. 115, 022501 (2015). [65] Y. K. Wang, Phys. Rev. C 96, 054324 (2017). [66] Y. K. Wang, Phys. Rev. C 97, 064321 (2018).

[67] Z. X. Ren, S. Q. Zhang, P. W. Zhao, N. Itagaki, J. A. Maruhn, and J. Meng, Sci. China Phys. Mech. Astron. 62, 112062 (2019).

[68] Z. Ren, P. Zhao, S. Zhang, and J. Meng, Nucl. Phys. A 996, 121696 (2020). [69] G. Lalazissis, S. Raman, and P. Ring, Atom. Data Nucl. Data Tabl. 71, 1 (1999).

[70] L.-S. Geng, H. Toki, and J. Meng, Prog. Theor. Phys. 113, 785 (2005). [71] A. V. Afanasjev, S. E. Agbemava, D. Ray, and P. Ring, Phys. Lett. B 726, 680 (2013). [72] Q. S. Zhang, Z. M. Niu, Z. P. Li, J. M. Yao, and J. Meng, Front. Phys. 9, 529 (2014). [73] S. E. Agbemava, A. V. Afanasjev, D. Ray, and P. Ring, Phys. Rev. C 89, 054320 (2014). [74] A. V. Afanasjev, S. E. Agbemava, D. Ray, and P. Ring, Phys. Rev. C 91, 014324 (2015). [75] K. Q. Lu, Z. X. Li, Z. P. Li, J. M. Yao, and J. Meng, Phys. Rev. C 91, 027304 (2015). [76] D. Peña-Arteaga, S. Goriely, and N. Chamel, Eur. Phys. J. A 52, 320 (2016). [77] X. W. Xia, Y. Lim, P. W. Zhao, H. Z. Liang, X. Y. Qu, Y. Chen, H. Liu, L. F. Zhang, S. Q.

Zhang, Y. Kim, and J. Meng, Atom. Data Nucl. Data Tabl. 121-122, 1 (2018). [78] Y. L. Yang, Y. K. Wang, P. W. Zhao, and Z. P. Li, Phys. Rev. C 104, 054312 (2021). [79] P. W. Zhao, Z. P. Li, J. M. Yao, and J. Meng, Phys. Rev. C 82, 054319 (2010). [80] L. Coraggio, A. Covello, A. Gargano, N. Itaco, and T. Kuo, Prog. Part. Nucl. Phys. 62, 135 (2009).

[81] B. R. Barrett, P. Navrátil, and J. P. Vary, Prog. Part. Nucl. Phys. 69, 131 (2013). [82] T. Otsuka, A. Gade, O. Sorlin, T. Suzuki, and Y. Utsuno, Rev. Mod. Phys. 92, 015002 (2020).

[83] C. R. Hoffman, T. Baumann, D. Bazin, J. Brown, G. Christian, P. A. DeYoung, J. E. Finck, N. Frank, J. Hinnefeld, R. Howes, P. Mears, E. Mosby, S. Mosby, J. Reith, B. Rizzo, W. F. Rogers, G. Peaslee, W. A. Peters, A. Schiller, M. J. Scott, S. L. Tabor, M. Thoennessen, P. J. Voss, and T. Williams, Phys. Rev. Lett. 100, 152502 (2008).

[84] T. Otsuka, T. Suzuki, J. D. Holt, A. Schwenk, and Y. Akaishi, Phys. Rev. Lett. 105, 032501 (2010).

[85] J. Meng and P. Ring, Phys. Rev. Lett. 77, 3963 (1996). [86] J. Meng, Nucl. Phys. A 635, 3 (1998).

[87] J. Meng and P. Ring, Phys. Rev. Lett. 80, 460 (1998).

[88] J. Meng, H. Toki, J. Y. Zeng, S. Q. Zhang, and S.-G. Zhou, Phys. Rev. C 65, 041302(R) (2002).

[89] S. Q. Zhang, J. Meng, and S. G. Zhou, Sci. China Ser. G: Phys. Ast. 46, 632 (2003). [90] J. Meng, I. Tanihata, and S. Yamaji, Phys. Lett. B 419, 1 (1998). [91] J. Meng, S. G. Zhou, and I. Tanihata, Phys. Lett. B 532, 209 (2002). [92] W. Zhang, J. Meng, S. Q. Zhang, L. S. Geng, and H. Toki, Nucl. Phys. A 753, 106 (2005).

[93] H. F. Lu, J. Meng, S. Q. Zhang, and S. G. Zhou, Eur. Phys. J. A 17, 19 (2003). [94] L.-F. Zhang and X.-W. Xia, Chin. Phys. C 40, 054102 (2016). [95] Y. Lim, X. Xia, and Y. Kim, Phys. Rev. C 93, 014314 (2016). [96] S.-G. Zhou, J. Meng, S. Yamaji, and S.-C. Yang, Chin. Phys. Lett. 17, 717 (2000). [97] S.-G. Zhou, J. Meng, P. Ring, and E.-G. Zhao, Phys. Rev. C 82, 011301(R) (2010). [98] L. Li, J. Meng, P. Ring, E.-G. Zhao, and S.-G. Zhou, Phys. Rev. C 85, 024312 (2012). [99] S.-G. Zhou, J. Meng, and P. Ring, Phys. Rev. C 68, 034323 (2003). [100] Y. Chen, L. Li, H. Liang, and J. Meng, Phys. Rev. C 85, 067301 (2012). [101] L. Li, J. Meng, P. Ring, E.-G. Zhao, and S.-G. Zhou, Chin. Phys. Lett. 29, 042101 (2012). [102] X.-X. Sun and S.-G. Zhou, Sci. Bull. 66, 2072 (2021). [103] X.-X. Sun and S.-G. Zhou, arXiv 2107.05925 (2021). [104] X.-X. Sun, J. Zhao, and S.-G. Zhou, Phys. Lett. B 785, 530 (2018). [105] X.-X. Sun, J. Zhao, and S.-G. Zhou, Nucl. Phys. A 1003, 122011 (2020). [106] K. Y. Zhang, D. Y. Wang, and S. Q. Zhang, Phys. Rev. C 100, 034312 (2019). [107] Z. H. Yang, Y. Kubota, A. Corsi, K. Yoshida, X.-X. Sun, J. G. Li, M. Kimura, N. Michel, K. Ogata, C. X. Yuan, Q. Yuan, G. Authelet, H. Baba, C. Caesar, D. Calvet, A. Delbart, M. Dozono, J. Feng, F. Flavigny, J.-M. Gheller, J. Gibelin, A. Giganon, A. Gillibert, K. Hasegawa, T. Isobe, Y. Kanaya, S. Kawakami, D. Kim, Y. Kiyokawa, M. Kobayashi, N. Kobayashi, T. Kobayashi, Y. Kondo, Z. Korkulu, S. Koyama, V. Lapoux, Y. Maeda, F. M. Marqués, T. Motobayashi, T. Miyazaki, T. Nakamura, N. Nakatsuka, Y. Nishio, A. Obertelli, A. Ohkura, N. A. Orr, S. Ota, H. Otsu, T. Ozaki, V. Panin, S. Paschalis, E. C. Pollacco, S. Reichert, J.-Y. Roussé, A. T. Saito, S. Sakaguchi, M. Sako, C. Santamaria, M. Sasano, H. Sato, M. Shikata, Y. Shimizu, Y. Shindo, L. Stuhl, T. Sumikama, Y. L. Sun, M. Tabata, Y. Togano, J. Tsubota, F. R. Xu, J. Yasuda, K. Yoneda, J. Zenihiro, S.-G. Zhou, W. Zuo, and T. Uesaka, Phys. Rev. Lett. 126, 082501 (2021).

[108] X.-X. Sun, Phys. Rev. C 103, 054315 (2021).

[109] K. Zhang, M.-K. Cheoun, Y.-B. Choi, P. S. Chong, J. Dong, L. Geng, E. Ha, X. He, C. Heo, M. C. Ho, E. J. In, S. Kim, Y. Kim, C.-H. Lee, J. Lee, Z. Li, T. Luo, J. Meng, M.-H. Mun, Z. Niu, C. Pan, P. Papakonstantinou, X. Shang, C. Shen, G. Shen, W. Sun, X.-X. Sun, C. K. Tam, Thaivayongnou, C. Wang, S. H. Wong, X. Xia, Y. Yan, R. W.-Y. Yeung, T. C. Yiu, S. Zhang, W. Zhang, and S.-G. Zhou (DRHBc Mass Table Collaboration), Phys. Rev. C

102, 024314 (2020).

[110] C. Pan, K. Zhang, and S. Zhang, Int. J. Mod. Phys. E 28, 1950082 (2019). [111] E. J. In, P. Papakonstantinou, Y. Kim, and S.-W. Hong, Int. J. Mod. Phys. E 30, 2150009 (2021).

[112] K. Zhang, X. He, J. Meng, C. Pan, C. Shen, C. Wang, and S. Zhang, Phys. Rev. C 104, L021301 (2021).

[113] C. Pan, K. Y. Zhang, P. S. Chong, C. Heo, M. C. Ho, J. Lee, Z. P. Li, W. Sun, C. K. Tam, S. H. Wong, R. W.-Y. Yeung, T. C. Yiu, and S. Q. Zhang, Phys. Rev. C 104, 024331 (2021).

[114] X.-T. He, C. Wang, K.-Y. Zhang, and C.-W. Shen, Chin. Phys. C 45, 101001 (2021). [115] H. Kucharek and P. Ring, Z. Phys. A 339, 23 (1991).

[116] P. Ring and P. Schuck, The Nuclear Many-body Problem (Springer-Verlag, Berlin, 1980). [117] P. W. Zhao, L. S. Song, B. Sun, H. Geissel, and J. Meng, Phys. Rev. C 86, 064324 (2012). [118] I. Angeli and K. Marinova, Atom. Data Nucl. Data Tabl. 99, 69 (2013). [119] T. Li, Y. Luo, and N. Wang, Atom. Data Nucl. Data Tabl. 140, 101440 (2021). [120] J. J. Li, W. H. Long, J. Margueron, and N. Van Giai, Phys. Lett. B 732, 169 (2014). [121] Y. Tian, Z. Ma, and P. Ring, Physics Letters B 676, 44 (2009).

[122] J. M. Dong, Y. H. Zhang, W. Zuo, J. Z. Gu, L. J. Wang, and Y. Sun, Phys. Rev. C 97, 021301(R) (2018).

[123] J. Dong, X. Shang, W. Zuo, Y. Niu, and Y. Sun, Nucl. Phys. A 983, 133 (2019). [124] X.-Q. Wang, X.-X. Sun, and S.-G. Zhou, Chin. Phys. C (2021), 10.1088/1674-1137/ac3904. [125] L.-S. Geng, J. Meng, H. Toki, W.-H. Long, and G. Shen, Chin. Phys. Lett. 23, 1139 (2006). [126] B. Pritychenko, M. Birch, B. Singh, and M. Horoi, Atom. Data Nucl. Data Tabl. 107, 1 (2016).

[127] Y. Ma, C. Su, J. Liu, Z. Ren, C. Xu, and Y. Gao, Phys. Rev. C 101, 014304 (2020). [128] X.-X. Dong, R. An, J.-X. Lu, and L.-S. Geng, arXiv 2109.09626 (2021). [129] J. Terasaki, S. Q. Zhang, S. G. Zhou, and J. Meng, Phys. Rev. C 74, 054318 (2006). [130] J. M. Yao, J. Meng, P. Ring, and D. Vretenar, Phys. Rev. C 81, 044311 (2010). [131] J. M. Yao, H. Mei, H. Chen, J. Meng, P. Ring, and D. Vretenar, Phys. Rev. C 83, 014308 (2011).

[132] J. C. Pei, F. R. Xu, Z. J. Lin, and E. G. Zhao, Phys. Rev. C 76, 044326 (2007). [133] P. G. Reinhard, Z. Phys. A 329, 257 (1988).