arXiv:2302.10047v4 [astro-ph.HE] 15 Mar 2023

Astronomy & Astrophysics manuscript no. main ©ESO 2023 June 10, 2023

Letter to the Editor

The peak-flux of GRB 221009A measured with GRBAlpha

Jakub Řípa^1, Hiromitsu Takahashi^2, Yasushi Fukazawa^2, Norbert Werner^1, Filip Münz^1, András Pál^3, Masanori Ohno^2, Marianna Dafčíková^1, László Mészáros^3, Balázs Csák^3, Nikola Husáriková^1 , Martin Kolář^1, Gábor Galgóczi^{4, 5}, Jean-Paul Breuer^1, Filip Hroch^1, Ján Hudec^6, Jakub Kapuš^6, Marcel Frajt^6, Maksim Rezenov^6, Robert Laszlo^7, Martin Koleda^7, Miroslav Šmelko^{8, 9}, Peter Hanák^9, Pavol Lipovský^9, Tomáš Urbanec^{10}, Miroslav Kasal^{10}, Aleš Povalač^{10}, Yuusuke Uchida^{11}, Helen Poon^2, Hiroto Matake^2, Kazuhiro Nakazawa^{12}, Nagomi Uchida^{13}, Tamás Bozóki^{14}, Gergely Dálya^{15}, Teruaki Enoto^{16}, Zsolt Frei^4, Gergely Friss^4, Yuto Ichinohe^{17} , Kornél Kapás^{18, 19, 5}, László L. Kiss^3, Tsunefumi Mizuno^2, Hirokazu Odaka^{20}, János Takátsy^{4, 5}, Martin Topinka^{21}, and Kento Torigoe^2

(Affiliations can be found after the references)

Received date / Accepted date

ABSTRACT

Context. On 2022 October 9 the brightest gamma-ray burst (GRB) ever observed lit up the high-energy sky. It was detected by a multitude of instruments, attracting the close attention of the GRB community, and saturated many detectors.

Aims. GRBAlpha, a nano-satellite with a form factor of a 1U CubeSat, has detected this extraordinarily bright long-duration GRB 221009A without saturation, but affected by pile-up. We present light curves of the prompt emission in 13 energy bands, from 80 keV to 950 keV, and perform a spectral analysis to calculate the peak flux and peak isotropic-equivalent luminosity.

Methods. Since the satellite’s attitude information is not available for the time of this GRB, more than 200 incident directions were probed in order to find the median luminosity and its systematic uncertainty.

Results. We found that the peak flux in the 80−800 keV range (observer frame) was F^p_h = 1300^{+1200}_{−200} ph cm^{−2}s^{−1} or F^p_{erg} = 5.7^{+3.7}_{−0.7} ×10^{−4} erg cm^{−2}s^{−1} and the fluence in the same energy range of the first GRB episode lasting 300 s, which was observable by GRBAlpha, was S = 2.2^{+1.4}_{−0.3}×10^{−2} erg cm^{−2} or S^{bol} = 4.9^{+0.8}_{−0.5} × 10^{−2} erg cm^{−2} for the extrapolated range of 0.9 − 8, 690 keV. We infer the isotropic-equivalent released energy of the first GRB episode to be E^{bol}_{iso} = 2.8^{+0.8}_{−0.5} × 10^{54} erg in the 1 − 10, 000 keV band (rest frame at z = 0.15). The peak isotropic-equivalent luminosity in the 92 − 920 keV range (rest frame) was L^p_{iso} = 3.7^{+2.5}_{−0.5} × 10^{52} erg s^{−1} and the bolometric peak isotropic-equivalent luminosity was L^{p,bol}_{iso} = 8.4^{+2.5}_{−1.5} × 10^{52} erg s^{−1} (4 s scale) in the 1 − 10, 000 keV range (rest frame). The peak emitted energy is E^∗_p = E_p(1 + z) = 1120 ± 470 keV. Our measurement of L^{p,bol}_{iso} is consistent with the Yonetoku relation. It is possible that, due to the spectral evolution of this GRB and orientation of GRBAlpha at the peak time, the true values of peak flux, fluence, L_{iso}, and E_{iso} are even higher.

Key words. stars: gamma-ray burst: individual: GRB 221009A

1. Introduction

On 2022 October 9 at 13:16:59.988 UT the Fermi Gammaray Burst Monitor (GBM) detected the exceptionally bright long gamma-ray burst (GRB) GRB 221009A (Veres et al. 2022; Lesage et al. 2022; Lesage et al. 2023). The burst was also observed by Fermi Large Area Telescope (LAT) up to the energy of 100 GeV (Pillera et al. 2022). Potentially remarkable detections of over 5000 very high energy (VHE) photons with energies up to 18 TeV were reported by the Large High Altitude Air Shower Observatory (LHAASO) (Huang et al. 2022) and a possible 251 TeV photon was reported by Carpet-2 (Dzhappuev et al. 2022), triggering the interest of the broader physics community.

The burst was localised by Neil Gehrels Swift Observatory’s Burst Alert Telescope (Dichiara et al. 2022) and followed up by Very Large Telescope’s (VLT) X-shooter (de Ugarte Postigo et al. 2022; Malesani et al. 2023), which determined that it occurred at a redshift of 0.151 and it belongs to very near long GRBs (Oates 2023).

It was detected also by a multitude of other instruments: AG- ILE/GRID (Piano et al. 2022), AGILE/MCAL (Ursi et al. 2022),

Send offprint requests to: J. Řípa, e-mail: ripa.jakub@gmail.com

BepiColombo/MGNS (Kozyrev et al. 2022), Insight-HXMT & SATech-01/GECAM-C (HEBS) (An et al. 2023), INTE- GRAL/SPI-ACS (Gotz et al. 2022), Konus-WIND & SRG/ART- XC (Frederiks et al. 2023), MAXI & NICER (Williams et al. 2023), Solar Orbiter/STIX (Xiao et al. 2022), STPSat-6/SIRI-2 (Mitchell et al. 2022), and XMM-Newton (Tiengo et al. 2023).

This brightest ever recorded GRB (Burns et al. 2023; O’Connor et al. 2023) saturated many of the gamma-ray burst detectors in orbit, hampering the efforts to determine its peak luminosity. In this Letter, we present the measurement of the peak flux and peak isotropic-equivalent luminosity of this extraordinary transient with the GRBAlpha nano-satellite.

2. GRBAlpha

GRBAlpha (Pál et al. 2020) is a 1U CubeSat carrying a GRB detector as a technology demonstration for an envisioned future CubeSat constellation (Werner et al. 2018; Mészáros et al. 2022). It was launched on 2021 March 22 to a sun-synchronous polar orbit at an altitude of ∼ 550 km and thus became the smallest astrophysical space observatory. About a third of the polar orbit is affected by high particle background and the duty cycle of the detector is around 67%. GRBAlpha’s detector consists

Article number, page 1 of 7

A&A proofs: manuscript no. main

of a 75 × 75 × 5 mm^3 CsI(Tl) scintillator read out by an array of Silicon PhotoMultipliers (SiPM), called multi-pixel photon counters (MPPCs), by Hamamatsu. The SiPM detectors are protected from proton damage by a 2.5 mm thick lead (PbSb3 alloy) shield and their degradation is being monitored. The on-board data acquisition software stack is being continuously upgraded to increase the duty cycle and data downlink rate. The ground segment is also supported by the radio amateur community and it takes advantage of the Satellite Networked Open Ground Station (SatNOGS)^1.

Following a commissioning phase, GRBAlpha started collecting data, monitoring the particle and photon background environment on low-Earth polar orbit and detecting transients (see Řípa et al. 2022a). When the satellite operates continuously, on average it detects a transient every 5-6 days^2. GRBAlpha detected GRB 221009A (Řípa et al. 2022b) when traversing the northern polar regions and during the peak brightness of the burst its detectors were not saturated, however, the measurement was influenced by pile-up.

The pile-up effect occurs by the chance coincidence of arrival and interaction of two or more gamma-ray photons in the detector’s scintillator within the detector’s inherent resolving time. In that case two or more events are registered as one event and the energies of the events within the same resolving time window are added (Knoll 2000).

3. Data analysis

GRBAlpha observed a peak count rate of 22 000 cnt s^{−1} in the ∼ 80−950 keV energy band at 2022-10-09 13:20:51.5 UTC. The duration of the GRB was > 250 s (Řípa et al. 2022b). During the detection, the satellite was flying above the northern polar region with elevated background levels. The end part of the GRB was recorded while passing the outer Van Allen radiation belt, therefore we can only report the lower limit on the duration and we cannot determine the T_{90} duration of the GRB. The GRBAlpha data for this event are composed of binned light curves with 4 s temporal resolution recorded in 16 energy bands. However, the three lowest energy bands are below the set on-board low-energy threshold limited by the noise peak of the MPPCs, making only 13 energy bands suitable for spectral analysis. The recorded raw count-rate curves in multiple energy bands are presented in Figure 1. Note that the energy calibration was performed by using radionuclides in the laboratory and by observing activation lines in orbit.

We perform spectral analysis to determine the peak flux of the GRB and its isotropic-equivalent peak luminosity. The mass model of GRBAlpha used for generating detector response matrices employed in the spectral analysis is displayed in Figure 2. It contains: the detector made of a 75 × 75 × 5 mm^3 CsI(Tl) scintillator in a 1.5 mm thick Al casing; a 2.5 mm thick PbSb3 radiation shield; a standard 1U CubeSat Al platform with four stacks of empty Printed Circuit Boards (PCBs) (glass epoxy FR4) and two LiFePO_4 batteries.

Full Monte Carlo simulation based on GEometry ANd Tracking (Geant4) toolkit^3 (Allison et al. 2016) was carried out to simulate incident photons with a flat energy distribution in the 5 − 1, 000 keV band covering the entire satellite structure. The

1 https://satnogs.org 2 The list of all GRBAlpha detected transients is available here https://monoceros.physics.muni.cz/hea/GRBAlpha/ 3 https://geant4.web.cern.ch/ deposited energy as a function of input photon energy was calculated scanning more than 200 incident angles Θ (zenith) and Φ (azimuth). The effective area versus incident photon energy for a few zenith angles Θ and a constant azimuth angle Φ = 270^∘ is shown in Figure 3. The drop over 900 keV is an artefact because we simulated photon energies only up to 1,000 keV and the photoabsorption peak (with broadening of the energy resolution) of such high energy photons is not accounted in this response. Therefore, in the spectral analysis, we conservatively only use data up to ∼ 810 keV.

To check for pile-up, we plot the fraction of the detected counts in each spectral band versus the total counts over the whole energy range for GRB 221009A (see Figure 4). The figure shows that above ∼ 10, 000 cnt/bin = 2,500 cnt s^{−1} the fraction of counts in the lower-energy bands decreases while the fraction of counts in the higher-energy bands increases, which may indicate the presence of pile-up. We note that below ∼ 10, 000 cnt/bin the decrease of the rates at high energies as a function of total counts in each bin is due to very low count numbers and the diagonal lines correspond to 1, 2, 3 . . . cnt/bin. At the peak of this transient GRBAlpha measured a count rate of m = 22, 000 cnt s^{−1} in the full band. The shaping parameter of the analogue electronics is τ_1 ≈ 10 μs. During the signal digitisation the pulse processing is done within the resolution time of τ_2 = 15 μs. We can calculate the probability that a pile-up appears as (Knoll 2000):

P = 1 − e^{−nτ2} , (1)

where n is the true event rate which can be calculated from the detected count rate m as:

n = − ln(1 − mτ) τ , (2)

where for m = 22, 000 cnt s^{−1} we obtain n = 26, 700 event s^{−1}. For the observed peak count rate we obtain the pile-up probability of ∼ 33% whereas the probability drops down to ∼ 3.7% for a count rate of m = 2, 500 cnt s^{−1}. Therefore, the observed spectrum at the peak time is affected by pile-up and in the following spectral analysis we avoid fitting the peak spectrum (which results in a flatter power-law fit) and rather fit the GRB spectrum before the peak time when the pile-up is negligible.

The spectral fitting was performed by the X-ray Spectral Fitting Package XSPEC^4 (Arnaud 1996). The source spectrum was fitted from time t_s = 13:20:33.5 UTC to t_s + 4 s and the background spectrum was taken from time t_b = 13:17:33.5 UTC to t_b +4 s. By applying this background, we obtained a backgroundsubtracted spectrum without any substantial bump or dip around 500 keV where the GRBAlpha background manifest a bump. The average background rate in the whole sensitivity range in this part of orbit is 340 cnt s^{−1} and the rate in the chosen 4 s background bin is 345 cnt s^{−1}. We set a systematic error of 2% to be added when evaluating χ^2. The peak time in the measured light curve in the whole sensitivity range of ∼ 80 − 950 keV was measured to be from t_p = 13:20:49.5 UTC to t_p + 4 s. Figure 5 displays the detected count spectra at the time bins t_s, t_b and t_p. At an approximate time t_r = ∼13:24:42.0 UTC the GRBAlpha nano-satellite entered the outer Van Allen radiation belt and the signal from the GRB became flooded by particle background. These times are marked in Figure 1.

GRBAlpha does not have an active attitude control system and the attitude knowledge was not being recorded at the time of GRB 221009A. The background variation had a periodicity

4 https://heasarc.gsfc.nasa.gov/xanadu/xspec/

Article number, page 2 of 7

Jakub Řípa et al.: The peak-flux of GRB 221009A measured with GRBAlpha

Fig. 1. The raw light curve of GRB 221009A as observed by GRBAlpha in multiple energy bands with 4 s cadence. The most bottom right panel shows the light curve in the whole sensitivity range. Times t_b, t_s and t_p mark the beginning of the used background interval, source spectral data and the peak time, respectively. About 30 s after the peak at t_p the GRB shows a second strong peak. Time t_r marks the approximate moment when the satellite entered the outer Van Allen radiation belt, which resulted in the final part of the GRB prompt emission being flooded by particle background. The sharp increase just after t_r is due to this background.

of ∼ 47 s when the satellite was near the north pole. From the communication with the satellite on the same day, we observed in the radio waterfall a periodicity of ∼ 23 s in the received radio power. The Ultra High Frequency (UHF) antenna on GRBAlpha is a half-wave dipole and thus a periodicity in the waterfall corresponds to half of the rotation or precession period of the satellite. Hence the satellite completed more then one revolution during the duration of the GRB. Therefore, we performed the spectral analysis for many detector response matrices simulated for various incident angles Θ and Φ. We fitted the measured spectra each time in order to obtain the best-fit χ^2 map and to obtain the most likely direction of the GRB with respect to the satellite’s coordinate system.

Article number, page 3 of 7

A&A proofs: manuscript no. main

We performed the spectral fitting with the power-law model, power-law with an exponential cutoff (CPL), and with the Band function. The lowest reduced χ^2 was obtained for the CPL model, as described in the following section. The reduced χ^2 maps show a similar trend, therefore, in the next section, we report results obtained with the CPL model only.

After we determined the most likely incidence angle of the GRB with respect to the detector, we calculated the flux and the isotropic-equivalent luminosity of the GRB using the best-fit spectral model. Scaling-up the flux and the luminosity obtained from the spectral fit at time t_s allows us to determine the flux and the luminosity at the peak time t_p. The scaling factor is approximately the ratio of the total detected counts at the time bin t_p over the total detected counts at the time bin t_s. The results are described in detail in the following section.

4. Results

The best fit for the source spectrum at the time bin t_s and after subtraction of the background at the time bin t_b was obtained for the on-axis direction Θ = 180^∘ and Φ = 0^∘ by the CPL model:

N(E) = A � E 1keV �−α exp � − E E_0 � , (3)

see Figure 6. The fit was performed in the range spanning 76 − 809 keV giving χ^2/DoF = 13.4/8 = 1.68. The best-fit parameters are: the photon index α = 0.7 ± 0.1; the rolloff energy E_0 = 750^{+410}_{−200} keV and the normalisation A = 8^{+6}_{−4} ph keV^{−1}cm^{−2}s^{−1} at 1 keV. The relatively large uncertainty of the normalisation is due to its correlation with the photon index alpha and the rolloff energy. The 68% confidence interval (CI) parameter uncertainties were calculated by XSPEC from the fit covariance matrix. The peak energy is E_p = E_0(2 − α) = 980 ± 410 keV.

The flux in the energy range of 80 − 800 keV in the observer frame for the best fit model for the same time interval t_s and the same Θ and Φ angles was derived to be F^s_{ph} = 68 ± 1 ph cm^{−2}s^{−1} or F^s_{erg} = 3.3 ± 0.1 × 10^{−5} erg cm^{−2}s^{−1} (68% CI). For the isotropic-equivalent luminosity in the energy range of 92 − 920 keV in the rest frame for the redshift of z = 0.151 (de Ugarte Postigo et al. 2022; Malesani et al. 2023) and cosmological parameter Ω_Λ = 0.685, flat universe and Hubble constant of H_0 = 67.4 km s^{−1} Mpc^{−1} (Planck Collaboration et al. 2020) it was obtained L^s_{iso} = 2.2^{+0.1}_{−0.0} × 10^{51} erg s^{−1} (68% CI). The uncertainties in flux and luminosity were derived from Markov Chain Monte Carlo (Hastings 1970) with following parameters: proposal Gaussian fit; re-scale the covariance matrix used in the proposal distribution by the factor of 0.125; chain length of 50,000; discard the first 1,000 steps prior to storing the chain and Goodman-Weare chain type with 16 walkers.

The approximate scaling factor f = (C_p − C_b)/(C_s − C_b) which is the ratio between the total detected counts C_p at the peak time bin t_p minus mean background counts C_b = 1, 360 cnt/bin = 340 cnt s^{−1} and the total detected counts C_s at the time bin t_s minus the mean background counts which gives f = (87, 950 − 1, 360)/(8, 689 −1, 360) = 11.8. We scale the flux and the luminosity obtained from the spectral fit at time t_s by this factor and by the pile-up correction factor of 1.21 in order to determine the flux and the luminosity at the peak time t_p. By applying this scaling to the flux and the isotropic-equivalent luminosity derived above for the time bin t_s we obtain for the peak flux F^p_h = 970±20 ph cm^{−2}s^{−1} or F^p_{erg} = 4.6±0.2×10^{−4} erg cm^{−2}s^{−1} and for the peak luminosity L^p_{iso} = 3.1 ± 0.1 × 10^{52} erg s^{−1}.

However, so far we did not consider the systematic uncertainty due to the uncertain attitude of the satellite (detector). Although, we derived the most likely orientation of the satellite with respect to the GRB from the best-fit χ^2 map, the difference in reduced χ^2 near the on-axis direction (Θ = 180^∘) and near the backside direction (Θ = 0^∘) is relatively low implying that the on-axis direction is not guaranteed. Therefore, we also calculated the flux and the luminosity using a more conservative approach.

We took the distribution of fluxes and luminosities obtained by fitting the spectra by the CPL model at the same time bin t_s, with the same background time bin t_b as described above, and used 192 different directions Θ and Φ which isotropically sample the sphere around the satellite following the Hierarchical Equal Area isoLatitude Pixelization (HEALPix)^5 tessellation (Górski et al. 2005). The best-fit χ^2 was obtained for each direction. The reduced χ^2_r map is shown in Figure 7. We removed 6 cases which have reduced χ^2_r > 4 because these we consider as not acceptable fits. They correspond to the direction towards the MPPCs’ lead shield. The resulting distribution contains 186 fluxes (luminosities). The median flux in the 80 − 800 keV range (observer frame) and the isotropic-equivalent luminosity in the 92 − 920 keV range (rest frame) at the same time bin t_s are: F^s_{ph} = 94^{+85}_{−17} ph cm^{−2}s^{−1} or F^s_{erg} = 4.0^{+2.6}_{−0.5} × 10^{−5} erg cm^{−2}s^{−1} and L^s_{iso} = 2.6^{+1.7}_{−0.3} × 10^{51} erg s^{−1}.

By applying the scaling factor f = (C_p − C_b)/(C_s − C_b) = 11.8 and the pile-up correction factor of 1.21 we obtain for the peak flux F^p_h = 1300^{+1200}_{−200} ph cm^{−2}s^{−1} or F^p_{erg} = 5.7^{+3.7}_{−0.7} × 10^{−4} erg cm^{−2}s^{−1} and for the isotropic-equivalent peak luminosity L^p_{iso} = 3.7^{+2.5}_{−0.5} × 10^{52} erg s^{−1}. When we repeat this analysis for the fluxes integrated over larger extrapolated energy range of 0.9 − 8, 690 keV, we obtain a peak flux F^{p,bol}_{erg} = 1.3^{+0.4}_{−0.2} × 10^{−3} erg cm^{−2}s^{−1} and a bolometric isotropic-equivalent peak luminosity L^{p,bol}_{iso} = 8.4^{+2.5}_{−1.5} × 10^{52} erg s^{−1} (4 s scale) in 1 − 10, 000 keV range (rest frame).

Results for the on-axis direction and those obtained by varying different incident directions are summarised in Table 1.

Having the peak flux F^p_{erg} we can calculate the approximate fluence S of the GRB as:

S =^{C−kCb}_{Cp −Cb} F^p_{erg}Δt, (4)

where C are total detected counts during the GRB, C_p are detected counts at the peak time bin t_p of duration Δt = 4 s, C_b are mean counts per bin and k is the number of bins over which we calculate the fluence. We obtained the fluence S = 2.2^{+1.4}_{−0.3} ×10^{−2} erg cm^{−2} in the 80−800 keV range of the first GRB episode lasting 300 s which was observable by GRBAlpha from time 2022-10-09 13:19:29.5 to 13:24:29.5 UTC. In the same way but using the wider extrapolated energy range of 0.9−8, 690 keV we obtain the fluence S^{bol} = 4.9^{+0.8}_{−0.5} × 10^{−2} erg cm^{−2} and the isotropic-equivalent released energy E^{bol}_{iso} = 2.8^{+0.8}_{−0.5} × 10^{54} erg in the 1 − 10, 000 keV range (rest frame).

5. Discussion

The highest peak flux and fluence of all GRBs recorded with CGRO/BATSE (Paciesas et al. 1999) and Fermi/GBM (von Kienlin et al. 2020) are 496 ph cm^{−2} s^{−1} (50–300 keV) and 8.1 × 10^{−4} erg cm^{−2} (50–300 keV) for GRB 130427A. The measured peak flux and fluence of GRB 221009A are

5 https://healpix.sourceforge.io

Article number, page 4 of 7

Jakub Řípa et al.: The peak-flux of GRB 221009A measured with GRBAlpha

Table 1. The summary of obtained fluxes and luminosities for the on-axis direction (Θ = 180^∘, Φ = 0^∘), the median values obtained by varying different incident angles and the values for the edge-on direction (Θ = 90^∘, Φ = 101^∘). The values marked with the superscript “s” and “p” were derived for the time bin t_s and the peak time t_p, respectively. Fluxes are for the 80 − 800 keV range (observer frame) and luminosities are for the 92 − 920 keV range (rest frame).

Method F^s_{ph} F^s_{erg} L^s_{iso} F^p_h F^p_{erg} L^p_{iso} (ph cm^{−2}s^{−1}) (10^{−5} erg cm^{−2}s^{−1}) (10^{51} erg s^{−1}) (ph cm^{−2}s^{−1}) (10^{−4} erg cm^{−2}s^{−1}) (10^{52} erg s^{−1}) On-axis 68 ± 1 3.3 ± 0.1 2.2^{+0.1}_{−0.0} 970 ± 20 4.6 ± 0.2 3.1 ± 0.1 Median 94^{+85}_{−17} 4.0^{+2.6}_{−0.5} 2.6^{+1.7}_{−0.3} 1300^{+1200}_{−200} 5.7^{+3.7}_{−0.7} 3.7^{+2.5}_{−0.5} Edge-on 390 ± 10 13.7^{+0.4}_{−0.1} 9.1^{+0.3}_{−0.1} 5600 ± 100 19.6^{+0.6}_{−0.1} 12.9^{+0.4}_{−0.2}

Fig. 2. The mass model of GRBAlpha used for generating detector response matrices with marked zenith and azimuth angles. The CsI(Tl) detector in its aluminium casing is shown in the red colour. The green colour marks the PbSb3 radiation shield. The grey colour marks the aluminium CubeSat platform, 4 stacks of PCBs and 2 LiFePO_4 batteries.

Fig. 3. Total response efficiency (effective area) versus incident photon energy for few zenith angles Θ and constant azimuth angle Φ = 270^∘.

1020^{+950}_{−160} ph cm^{−2} s^{−1} and 8.3^{+5.3}_{−1.1} × 10^{−3} erg cm^{−2} in the 50– 300 keV band. The duration of GRB 221009A is longer than 100 s, compared to the 10–20 s for GRB 130427A, giving a relatively larger fluence ratio. This indicates that GRB 221009A is indeed exceptionally bright. While the size of the CsI scintillator on GRBAlpha is not small (∼ 55 cm^2 face-on), the low-energy threshold of the detector is relatively high at around 80 keV due to the radiation damage of the SiPM detectors. This allowed GR- BAlpha to avoid saturation of the count rate in the digital processing, allowing us to trace the light curve. Note that the brightest gamma-ray flux from a celestial object was observed during

Fig. 4. The fraction of the detected counts in each spectral band vs the total counts over the whole energy range for GRB 221009A and for background while passing the north polar region. The counts were detected in 4 s time bins. The figure shows that above ∼ 10, 000 cnt/bin = 2,500 cnt/s the fraction of counts in low-energy bands decreases while the fraction of counts in high-energy bands increases which can indicate the pile-up effect.

the giant flare from the magnetar SGR 1806-20 in 2004 and its peak flux was around 10–20 erg s^{−1} in the 20–10,000 keV band (Mazets et al. 2005; Terasawa et al. 2005), which is 4–5 orders of magnitude higher than that of GRB 221009A.

We note that this exceptionally bright GRB has one of the highest isotropic-equivalent peak luminosities ever reported (Burns et al. 2023). GRBs with higher peak luminosities were observed in the past, but at significantly larger redshifts, see e.g. Yonetoku et al. (2010). In their Figure 3 the authors provide the correlation between the rest-frame spectral peak energy and 1- second peak luminosity of short and long GRBs. Our measurement of L^{p,bol}_{iso} = 8.4^{+2.5}_{−1.5} × 10^{52} erg s^{−1} and E^∗_p = E_p(1 + z) = 1120 ± 470 keV is consistent with this relation within the systematic errors.

In Figure 1 one can see that at low energies, mainly at 80−120 keV, the background shows a wavy pattern. This is most likely due to the periodic motion of GRBAlpha, exposing a different cross-section of the detector to the Cosmic X-ray Background (CXB) and the secondary gamma-rays induced in the Earth’s atmosphere by cosmic rays (Galgóczi et al. 2021). On the same day that we detected this GRB, we observed a periodicity also in the received radio power in the waterfalls, while downloading data from the satellite, revealing that the satellite completed more then one revolution during the duration of the GRB. Therefore, change of the satellite’s attitude between times

Article number, page 5 of 7

A&A proofs: manuscript no. main

Fig. 5. Black: the detected count spectrum of GRB 221009A at time t_s minus the background at time t_b. Red: the background at time t_b. Green: the detected count spectrum of GRB 221009A at the peak time t_p = 2022-10-09 13:20:49.5 UT, minus the background at time t_b, showing the spectral hardening at highest energies present around the GRB peak.

Fig. 6. The spectrum of the GRB 221009A best fit by the CPL model fitted from t_s = 2022-10-09 13:20:33.5 UTC to t_s + 4 s in the range of 76 − 809 keV for Θ = 180^∘ and Φ = 0^∘.

Fig. 7. The reduced χ^2 map of the best fits with CPL model for different angles Θ (vertical) and Φ (horizontal) in degrees.

t_s and t_p can result in a systematic error of the reported peak luminosity and total emitted energy. As shown in Table 1, the luminosity derived for the edge-on direction is 3.5 times higher than the median value. We cannot exclude that the detector on board of GRBAlpha was oriented edge-on towards the GRB at the time of the peak and therefore, we cannot exclude that the obtained median peak flux and luminosity are underestimated.

The time-resolved spectral analysis of GRB 221009A by Konus-WIND (Frederiks et al. 2023) reveals spectral evolution during the burst with higher photon index α and peak energy E_p around the peak time reaching E_p ≈ 3 MeV. Hence our method based on scaling the flux from the spectrum at time t_s to peak time t_p may underestimate the resultant peak flux and fluence. Therefore, it is possible that the true peak flux and fluence are higher.

The highest energy bands around 800 − 950 keV as shown in Figure 1 have increased number of counts during the GRB peak compared to lower energy bands around 700 − 800 keV. This is also evident in the raw count spectrum at the peak time t_p presented in Figure 5. This could be due to an instrumental effect because of the high incident photon rate.

6. Conclusions

The conclusions can be summarised in these main points:

– GRBAlpha, a low-cost nano-satellite on a low-Earth orbit, has detected the exceptionally bright long gamma-ray burst GRB 221009A without saturation, but effected by pile-up, providing light curves of the prompt emission in 13 energy bands from 80 keV to 950 keV.

– The peak flux in the 80 − 800 keV range (observer frame) was measured to be F^p_h = 1300^{+1200}_{−200} ph cm^{−2}s^{−1} or F^p_{erg} = 5.7^{+3.7}_{−0.7} × 10^{−4} erg cm^{−2}s^{−1} and for the wider extrapolated energy range of 0.9 − 8, 690 keV, we obtained F^{p,bol}_{erg} = 1.3^{+0.4}_{−0.2} × 10^{−3} erg cm^{−2}s^{−1}.

– The peak isotropic-equivalent luminosity in the 92−920 keV range (rest frame) was L^p_{iso} = 3.7^{+2.5}_{−0.5} × 10^{52} erg s^{−1} and the bolometric peak isotropic-equivalent luminosity in the 1 − 10, 000 keV range (rest frame) was L^{p,bol}_{iso} = 8.4^{+2.5}_{−1.5} × 10^{52} erg s^{−1} (4 s scale). Our measurement of L^{p,bol}_{iso} is consistent with the Yonetoku relation between the rest-frame spectral peak energy and the peak luminosity of GRBs.

– The fluence in the 80 − 800 keV range of the first GRB episode lasting 300 s which was observable by GRBAlpha from 2022-10-09 13:19:29.5 to 13:24:29.5 UTC was measured to be S = 2.2^{+1.4}_{−0.3} × 10^{−2} erg cm^{−2} and S^{bol} = 4.9^{+0.8}_{−0.5} × 10^{−2} erg cm^{−2} for the extrapolated range of 0.9 − 8, 690 keV. We infer from this extrapolated fluence that the isotropicequivalent released energy of the first GRB episode was E^{bol}_{iso} = 2.8^{+0.8}_{−0.5} × 10^{54} erg in the 1 − 10, 000 keV band (rest frame).

– It is possible that due to the spectral evolution during the peaks of this GRB, as reported by Konus-WIND (Frederiks et al. 2023), the true peak flux, fluence, L_{iso} and E_{iso} can be higher than our obtained values. We cannot exclude that the GRBAlpha’s detector was oriented near edgeon with respect to the GRB 221009A at the peak time which would also mean that the true values can be higher than our estimations.

Acknowledgements. We are thankful to Peter Veres and Stephen Lesage for discussions regarding the detection of this GRB by Fermi/GBM and other instruments and to Tomáš Plšek for discussions about MCMC and XSPEC. We are also thankful to Nozomu Kogiso, Maumu Yoneyama, Mizuki Moritaki, Tatsuya Kano and James W. Cutler for providing their SatNOGS stations for collecting GRBAlpha’s telemetry. We acknowledge support by the KEP-7/2018 and KEP2/2020 grants of the Hungarian Academy of Sciences and SA-40/2021 of the Eötvös Loránd Research Network for satellite components and payload developments

Article number, page 6 of 7

Jakub Řípa et al.: The peak-flux of GRB 221009A measured with GRBAlpha

and the grant IF-7/2020 for providing the financial support for ground infrastructure. This research has been supported by the European Union’s Horizon 2020 programme under the AHEAD2020 project (grant agreement n. 871158) and by the MUNI Award for Science and Humanities funded by the Grant Agency of Masaryk University. GD is supported by the Ghent University Special Research Funds (BOF) project BOF/STA/202009/040 and the Fonds Wetenschappelijk Onderzoek (FWO) iBOF project BOF20/IBF/124. This work was supported by the Internal Grant Agency of Brno University of Technology, project no. FEKT-S-20-6526. This research has been also supported by JSPS and HAS under Japan-Hungary Research Cooperative Program, JSPS KAKENHI Grant Number 17H06362, 19H01908, and 21KK0051. We are grateful to the Ministry of Education, Science, Research and Sport of the Slovak Republic for the support of the GRBAlpha mission.

References

Allison, J., Amako, K., et al. 2016, Nuclear Instruments and Methods in Physics Research Section A: Accelerators, Spectrometers, Detectors and Associated Equipment, 835, 186 An, Z.-H., Antier, S., Bi, X.-Z., et al. 2023, arXiv e-prints, arXiv:2303.01203 Arnaud, K. A. 1996, in Astronomical Society of the Pacific Conference Series, Vol. 101, Astronomical Data Analysis Software and Systems V, ed. G. H. Jacoby & J. Barnes, 17 Burns, E., Svinkin, D., Fenimore, E., et al. 2023, arXiv e-prints, arXiv:2302.14037 de Ugarte Postigo, A., Izzo, L., Pugliese, G., et al. 2022, GRB Coordinates Network, 32648, 1 Dichiara, S., Gropp, J. D., Kennea, J. A., et al. 2022, The Astronomer’s Telegram, 15650, 1 Dzhappuev, D. D., Afashokov, Y. Z., Dzaparova, I. M., et al. 2022, The Astronomer’s Telegram, 15669, 1 Frederiks, D., Svinkin, D., Lysenko, A. L., et al. 2023, arXiv e-prints, arXiv:2302.13383 Galgóczi, G., Řípa, J., Campana, R., et al. 2021, Journal of Astronomical Telescopes, Instruments, and Systems, 7, 028004 Górski, K. M., Hivon, E., Banday, A. J., et al. 2005, ApJ, 622, 759 Gotz, D., Mereghetti, S., Savchenko, V., et al. 2022, GRB Coordinates Network, 32660, 1 Hastings, W. K. 1970, Biometrika, 57, 97 Huang, Y., Hu, S., Chen, S., et al. 2022, GRB Coordinates Network, 32677, 1 Knoll, G. F. 2000, Radiation detection and measurement (Wiley) Kozyrev, A. S., Golovin, D. V., Litvak, M. L., et al. 2022, GRB Coordinates Network, 32805, 1 Lesage, S., Veres, P., Roberts, O. J., et al. 2022, GRB Coordinates Network, 32642, 1 Lesage, S. et al. 2023, in preparation Malesani, D. B., Levan, A. J., Izzo, L., et al. 2023, arXiv e-prints, arXiv:2302.07891 Mazets, E. P., Cline, T. L., Aptekar, R. L., et al. 2005, arXiv e-prints [arXiv:astro-ph/0502541] Mészáros, L., Pál, A., Werner, N., et al. 2022, in Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 12181, Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, ed. J.- W. A. den Herder, S. Nikzad, & K. Nakazawa, 121811L Mitchell, L. J., Phlips, B. F., & Johnson, W. N. 2022, GRB Coordinates Network, 32746, 1 Oates, S. 2023, Universe, 9, 113 O’Connor, B., Troja, E., Ryan, G., et al. 2023, arXiv e-prints, arXiv:2302.07906 Paciesas, W. S., Meegan, C. A., Pendleton, G. N., et al. 1999, ApJS, 122, 465 Pál, A., Ohno, M., Mészáros, L., et al. 2020, in Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 11444, Space Telescopes and Instrumentation 2020: Ultraviolet to Gamma Ray, ed. J.-W. A. den Herder, S. Nikzad, & K. Nakazawa, 114444V Piano, G., Verrecchia, F., Bulgarelli, A., et al. 2022, GRB Coordinates Network, 32657, 1 Pillera, R., Bissaldi, E., Omodei, N., La Mura, G., & Longo, F. 2022, The Astronomer’s Telegram, 15656, 1 Planck Collaboration, Aghanim, N., Akrami, Y., et al. 2020, A&A, 641, A6 Terasawa, T., Tanaka, Y. T., Takei, Y., et al. 2005, Nature, 434, 1110 Tiengo, A., Pintore, F., Vaia, B., et al. 2023, arXiv e-prints, arXiv:2302.11518 Ursi, A., Panebianco, G., Pittori, C., et al. 2022, GRB Coordinates Network, 32650, 1 Veres, P., Burns, E., Bissaldi, E., et al. 2022, GRB Coordinates Network, 32636, 1 von Kienlin, A., Meegan, C. A., Paciesas, W. S., et al. 2020, ApJ, 893, 46

Řípa, J., Pál, A., Ohno, M., et al. 2022a, in Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 12181, Space Telescopes and Instrumentation 2022: Ultraviolet to Gamma Ray, ed. J.-W. A. den Herder, S. Nikzad, & K. Nakazawa, 121811K Řípa, J., Pal, A., Werner, N., et al. 2022b, GRB Coordinates Network, 32685, 1 Werner, N., Řípa, J., Pál, A., et al. 2018, in Society of Photo-Optical Instrumentation Engineers (SPIE) Conference Series, Vol. 10699, Space Telescopes and Instrumentation 2018: Ultraviolet to Gamma Ray, ed. J.-W. A. den Herder, S. Nikzad, & K. Nakazawa, 106992P Williams, M. A., Kennea, J. A., Dichiara, S., et al. 2023, arXiv e-prints, arXiv:2302.03642 Xiao, H., Krucker, S., & Daniel, R. 2022, GRB Coordinates Network, 32661, 1 Yonetoku, D., Murakami, T., Tsutsui, R., et al. 2010, PASJ, 62, 1495

1 Department of Theoretical Physics and Astrophysics, Faculty of Science, Masaryk University, Kotlářská 267/2, Brno 611 37, Czech Republic; e-mail: ripa.jakub@gmail.com 2 Department of Physics, Graduate School of Advanced Science and Engineering, Hiroshima University, Higashi-Hiroshima, Japan 3 Konkoly Observatory, Research Centre for Astronomy and Earth Sciences, Budapest, Hungary 4 Eötvös Loránd University, Budapest, Hungary 5 Wigner Research Centre for Physics, Budapest, Hungary 6 Spacemanic Ltd, Bratislava, Slovakia 7 Needronix Ltd, Bratislava, Slovakia 8 EDIS vvd., Košice, Slovakia 9 Faculty of Aeronautics, Technical University of Košice, Slovakia 10 Department of Radio Electronics, Faculty of Electrical Engineering and Communication, Brno University of Technology, Brno, Czech Republic 11 Tokyo University of Science, Noda, Chiba, Japan 12 Department of Physics, Nagoya University, Nagoya, Aichi, Japan 13 Institute of Space and Astronautical Science, Japan Aerospace Exploration Agency, Japan 14 Institute of Earth Physics and Space Science (EPSS), Sopron, Hungary 15 Department of Physics and Astronomy, Universiteit Gent, B-9000 Ghent, Belgium 16 School of Science, Kyoto University, Kyoto, Japan 17 Department of Physics, Rikkyo University, Tokyo, Japan 18 Department of Theoretical Physics, Institute of Physics, Budapest University of Technology and Economics, Műegyetem rkp. 3, H- 1111 Budapest, Hungary 19 MTA-BME Quantum Dynamics and Correlations Research Group, Budapest University of Technology and Economics, Műegyetem rkp. 3, H-1111 Budapest, Hungary 20 Department of Earth and Space Science, Osaka University, Toyonaka, Osaka, Japan 21 INAF - Istituto di Astrofisica Spaziale e Fisica Cosmica, Via A. Corti 12, I-20133 Milano, Italy

Article number, page 7 of 7