arXiv:astro-ph/0506243v1 10 Jun 2005

DRAFT VERSION JUNE 19, 2014 Preprint typeset using L^ATEX style emulateapj v. 6/22/04

CONCURRENT 43 AND 86 GHZ VERY LONG BASELINE POLARIMETRY OF 3C273

JOANNE M. ATTRIDGE^1, JOHN F. C. WARDLE^2, AND DANIEL C. HOMAN^3 Draft version June 19, 2014

ABSTRACT We present sub-milliarcsecond resolution total intensity and linear polarization VLBI images of 3C 273, using concurrent 43 and 86 GHz data taken with the Very Long Baseline Array in May 2002. The structure seen in the innermost jet suggest that we have fortuitously caught the jet in the act of changing direction. The polarization images confirm that the core is unpolarized (fractional polarization ≤ 1%) at 86 GHz, but also show well ordered magnetic fields (m ∼ 15%) in the inner jet, at a projected distance of 2.3 pc from the core. In this strongly polarized region, the rotation measure changes across the jet by ∼ 4.2 × 10^4 rad m^{−2} over an angular width of about 0.3 milliarcseconds. If the lack of polarization in the core is also attributed to a Faraday screen, then a rotation measure dispersion ≳ 5.2 × 10^4 rad m^{−2} must be present in or in front of that region. These are among the highest rotation measures reported so far in the nucleus of any active galaxy or quasar, and must occur outside (but probably close to) the radio emitting region. The transverse rotation measure gradient is in the same sense as that observed by Asada et al and by Zavala and Taylor at greater core distances. The magnitude of the transverse gradient decreases rapidly with distance down the jet, and appears to be variable. Subject headings: galaxies: active—galaxies: jets—galaxies: magnetic fields—polarization—quasars: individual (3C 273)

1. INTRODUCTION

Multi-frequency Very Long Baseline Polarimetry (VLBP) observations are crucial for determining the magnetic field structure and the distribution of Faraday rotating material in the innermost few parsecs of the cores of active galaxies and quasars.

The first successful VLBP observations at 86 GHz were reported by Attridge (2001), who presented polarized images of the well-known quasars 3C 273 ansd 3C 279. Here we report concurrent 43 GHz (λ6.9mm) and 86 GHz (λ3.5mm) VLBP of the 3C 273 that allow us to investigate the distribution of Faraday rotating material near the core of this object, probing linear scales as small as a few light years^4.

3C 273 (J1229+0203) is a good source on which to attempt 86 GHz VLBP, as it is one of the brightest quasars in the sky at that frequency. Also, its low redshift of z = 0.158 gives very high linear resolution (2.73 pc/mas) at the source. It is also a well studied superluminal source. For instance, Homan et al (2001) measured the proper motions of five jet components over six epochs in 1996 at both 15 and 22 GHz. Results ranged from 0.77 to 1.15 mas yr^{−1}, corresponding to superluminal motions of β_{app} = 7.9 − 11.9.

2. OBSERVATIONS AND CALIBRATION

Concurrent 43 and 86 GHz observations of 3C 273 were performed on 9 May 2002 (epoch 2002.35) using the Very Long Baseline Array (VLBA)^5 over 10.5 hours. The VLBA was equipped with all ten 43 GHz receivers and seven 86 GHz

1 MIT Haystack Observatory, Off Route 40, Westford, MA 01886; jattridge@haystack.mit.edu

2 Physics Department MS057, Brandeis University, Waltham, MA 02454; wardle@brandeis.edu

3 Jansky Fellow, National Radio Astronomy Observatory; present address Department of Physics and Astronomy, Denison University, Granville, OH 43023; homand@denison.edu

4 H_0 = 70 km s^{−1} Mpc^{−1}, Ω_M = 0.3, and Ω_Λ = 0.7 are assumed in all calculations.

5 The National Radio Astronomy Observatory is a facility of the National Science Foundation, operated under a cooperative agreement by Associated Universities, Inc.

receivers (Fort Davis, Kitt Peak, Los Alamos, Mauna Kea, North Liberty, Owens Valley, Pie Town), effectively yielding the same resolution at each frequency. With a CLEAN beam of about 0.5 × 0.25 mas, the linear resolution at the source is about 6 × 3 light years.

The data were recorded with a total bandwidth of 64 MHz, and were correlated at the National Radio Astronomy Observatory (NRAO) in Socorro, NM. Approximately 1.5 hours total integration was spent on 3C 273 at 43 GHz, and 3.0 hours at 86 GHz. These integration times lead to theoretical RMS noise values of ∼0.5 mJy beam^{−1} at 43 GHz, and ∼2 mJy beam^{−1} at 86 GHz. The observations of 3C 273 were interleaved with those of the quasar 3C 279, which was a second target source and served to confirm our calibration. Results for 3C 279 will be presented in a separate paper.

The NRAO AIPS and Caltech DIFMAP packages were used for calibration and hybrid imaging. Details about VLBP calibration and imaging may be found in Cotton (1993) and Roberts, Wardle, & Brown (1994). Methods to account for the complexities of 86 GHz calibration not present in lower frequency data, and to check the validity of the 86 GHz solutions are described in Attridge (2001) and Attridge, Greve, & Krichbaum (1999b).

The calibration of the instrumental polarization (D-terms) was performed for 3C 273 and 3C 279 separately, and results were compared. At 43 GHz, the typical D-term values were found to be ∼ 0.03, and at 86 GHz they were ∼ 0.11. The r.m.s. difference between the D terms determined using 3C 273 and those determined using 3C 279 was 0.02 at 86 GHz. This is a measure of the errors in the determination of the D terms. Following the prescription in Appendix 1 of Roberts et al (1994), we estimate that the corresponding error in fractional polarization in the images is ∼ 0.003 (0.3%). This is consistent with the observed fractional polarization of the core component of 3C 273, which is ≤ 1.0%.

3. IMAGES

Naturally weighted images of 3C 273 in total intensity, polarized intensity, and fractional linear polarization at 43 GHz

2 Attridge et al

FIG. 1.— Naturally weighted images of 3C 273, epoch 2002.35, made with the VLBA at 43 GHz (left) and 86 GHz (right). In each panel we display (a) Total intensity distribution,(b) Linear polarization distribution, with tick marks showing the orientation χ of the electric vectors, and (c) Fractional polarization distribution in grayscale (in color on astro-ph), over every other I contour. The restoring beams are shown in the lower left corners. At 43 GHz, the contours start at 15 mJy/beam and increase by factors of √ 2 up to peak values of 4547 mJy/beam (total intensity) and 630 mJy/beam (polarized intensity). At 86 GHz, the contours start at 25 mJy/beam and increase by factors of √ 2 up to peak values of 1815 mJy/beam (total intensity) and 256 mJy/beam (polarized intensity).

and 86 GHz are shown in Figure 1. Tick marks represent the orientation of the electric vectors of the polarized radiation. The orientations of the EVPAs at 43 GHz were derived using data from the “VLA/VLBA Polarization Calibration Page” (Taylor & Myers 2000), in which 3C 273 was observed only one day prior to our own observations.

Currently, there is no source to use as a calibrator to set the zero-point of the EVPAs at 86 GHz. We therefore arbitrarily chose to rotate tick marks in the 86 GHz P image so that the EVPA of component 7 is the same at 43 and 86 GHz. To see the EVPAs more easily, Figure 2 shows a zoom of the polarized emission from the core region at each frequency.

Model fits to the u-v data are presented in Table 1; component labels for 86 GHz were matched to corresponding 43 GHz components for ease of comparison.

The 43 GHz total intensity image has a SNR of 2400, and a peak to lowest contour dynamic range of ∼300:1. The 86 GHz I image presented in Figure 2a has a SNR of 590, and a peak to lowest contour dynamic range of ∼75:1. The corresponding numbers for the P images are about 7 times smaller.

3.1. Total intensity images

The 43 GHz images in Figure 1 show the well known corejet structure of 3C 273. The core is component D and the jet stretches to the south-west (and continues for another 20,000 mas in all wavebands). At this resolution, the jet is quickly resolved. At 86 GHz, the resolution is similar (because of the smaller array) but the lower sensitivity means that essentially only the first milliarcsecond of the jet can be seen.

The component we label Q1/W1 is the same as component U4/K4 in Ojha et al (2004), who measured a proper motion of 9.9 ± 0.4c. Notice that the inner jet no longer points directly towards this component. This is because the direction of the inner jet varies on fairly short timescales over a range of structural position angles (SPAs) between at least −110^∘ and −140^∘ (e.g. Krichbaum et al. 1990). Abraham & Romero (1999) proposed that the variation in orientation of the inner jet was periodic with a period of about 20 years, and they fitted a precessing jet model to the extant VLBI observations. It is now clear (Ojha et al 2003; Chen et al 2005) that the jet orientation varies on a timescale of months rather than decades, and is not periodic.

The bright inner jet components in Figure 1, components 6 and 7, are almost equidistant from the core at r ∼ 0.9 mas, but at distinctly different structural position angles (SPAs). The northern component (6) is somewhat better aligned with the downstream jet components, and has a SPA of −123^∘. The southern component (7) is stronger, has a flatter spectrum, and a SPA of −144^∘. It is interesting that both are present simultaneously. We are not aware of earlier images that show such a morphology, and we conjecture that we have caught 3C 273 "in the act" of changing its jet direction. If this is so, component 7, because of its location and spectrum, is presumably the younger component, and is defining a new jet direction. Since it has already drawn level with component 6, we expect component 7 to be moving faster. Proper motion measurements will easily support or refute these conjectures.

3.2. Polarization images

43 and 86 GHz polarimetry of 3C273 3

TABLE 1 EPOCH 2002.35 MODELFIT RESULTS FOR 3C 273

Major Minor Com- r θ I m χ axis axis ϕ ponent (mas) (deg) (Jy) (%) (deg) (mas) (mas) (deg) (1) (2) (3) (4) (5) (6) (7) (8) (9)

43 GHz D . . . . . . 3.03 ≤ 0.2 . . . 0.1 0.1 40 Q8 0.35 −148 1.32 6.7 28 0.3 0.1 35 Q7 0.85 −145 4.60 14.8 −63 0.1 < 0.1 −47 Q6 0.87 −124 2.95 15.6 −31 0.3 0.1 80 Q5 1.50 −132 0.08 . . . . . . < 0.1 < 0.1 . . . Q4 2.56 −120 0.08 . . . . . . < 0.1 < 0.1 . . . Q3 3.62 −133 0.91 9.5 −28 1.5 0.4 43 Q2 4.56 −132 0.39 . . . . . . 0.7 0.2 −28 Q1 9.69 −116 0.90 23.3 −82 0.9 0.6 19

86 GHz D . . . . . . 1.37 ≤ 1.0 . . . 0.1 < 0.1 55 W9 0.16 −151 0.16 . . . . . . < 0.1 < 0.1 . . . W8 0.39 −137 0.12 . . . . . . < 0.1 < 0.1 . . . W7 0.86 −143 2.09 16.7 −63^∗ 0.2 0.1 −35 W6 0.93 −122 0.71 16.2 −97 0.2 < 0.1 70 W3 3.53 −135 0.03 . . . . . . < 0.1 < 0.1 . . . W2 4.62 −131 0.05 . . . . . . 0.5 0.1 −21 W1 9.52 −116 0.07 . . . . . . 0.5 < 0.1 27

NOTE. — Columns are as follows: (1) component name; (2) distance from easternmost feature D; (3) position angle of separation from D; (4) total intensity; (5) fractional linear polarization; (6) orientation of the linear polarization position angle; (7) major axis of the model component; (8) minor axis of the model component; (9) orientation of the major axis._∗

All EVPAs at 86 GHz have been arbitrarily rotated so that the 86 GHz and 43 GHz values for this component are aligned.

The polarized images shown in Figures 1 and 2 show that the inner jet is strongly polarized. Components Q6/W6 and Q7/W7 both exhibit fractional polarizations near 15% at both frequencies. Two years earlier, Attridge (2001) found a component at a similar location, whose fractional polarization was 11% at 86 GHz. By contrast, linear polarization is not detected in the core (component D) at either frequency. The limits are 0.2% at 43 GHz, and 1% at 86 GHz. This also agrees with Attridge’s (2001) observations.

At lower frequencies, 3C 273 also displays moderate linear polarization in the jet, and little or no polarization in the core. These are properties common to many AGN (e.g. Taylor 1998; Lister & Smith 2000; Pollack et al. 2003; Ojha et al. 2004).

4. DIFFERENTIAL FARADAY ROTATION ACROSS THE JET

Although we are unable to determine the zero point for the EVPAs at 86 GHz, Figure 3 shows clearly that there is a large difference in Faraday rotation between jet components 6 and 7. At 43 GHz the difference in EVPAs is χ_7 − χ_6 = +32.7^∘. At 86 GHz the difference in EVPAs is χ_7 − χ_6 = −33.9^∘. The difference between these numbers is 66.6^∘ = 1.16 radians, and this is independent of the zero point at 86 GHz. There is therefore an absolute difference in rotation measure between components 6 and 7 of ∼ 3.2 × 10^4 rad m^{−2}. In the source frame we multiply by (1 + z)^2, which gives ∼ 4.3 × 10^4 rad m^{−2}.

The smallest possible rotation measures consistent with these data are −2.1 × 10^4 rad m^{−2} for component 7 and +2.1 × 10^4 rad m^{−2} for component 6. These are among the largest rotation measures ever observed. One or both of them are actually lower limits, because we have only determined their difference. The distance between components 6 and 7 is 0.3 mas. If we express the rotation measure difference as an angular gradient, then it is 1.3 × 10^5 rad m^{−2} mas^{−1}.

Both Asada et al (2002) and recently Zavala & Taylor (2005) have also measured differences in rotation measure across the jet of 3C 273 at the same location, about 7 mas from the core, but at different epochs (1995.9 and two epochs in 2000 respectively). Asada et al found a gradient of about 80 rad m^{−2} mas^{−1}. Zavala & Taylor find a gradient of 500 rad m^{−2} mas^{−1}, and suggest that Asada et al measured a smaller value because of lower resolution (their observations were made at 5 and 8 GHz). The transverse gradient at 7 mas from the core has the same sign as we find at 0.9 mas (more positive rotation measure on the north side of the jet), but it is smaller by 2-3 orders of magnitude. (We would require simultaneous observations to make the previous statement more precise.)

It is interesting to compare the rotation measures found in the middle of each slice where the signal to noise ratio is highest and the effect of a gradient is negligible (so long as there is little depolarization). Asada et al measure about 350 rad m^{−2} at the center of their slice in 1995. This is consistent with the observations at 15 and 22 GHz throughout the following year reported by Ojha et al (2004). Zavala and Taylor measure about 800 rad m^{−2} at the same location some 4 years later. We suggest that all these measurements are in fact correct, and that the rotation measure distribution varies in time.

FIG. 2.— Zoomed linear polarization distributions from Figure 1 reveal more clearly the orientation of the EVPAs as discussed in §4; (a) is at 43 GHz and (b) is at 86 GHz, both showing every second contour.

4 Attridge et al

This would also be consistent with the results of deep multiwavelength observations made by T. Chen (private communication), and with observations of the core region (see next section).

The Faraday rotation we observe must be external to components 6 and 7. Internal Faraday rotation will inevitably depolarize the source (sometimes called "front-back" depolarization) and there is no sign of this (see Table 1). In general the fractional polarization drops by a factor of two when the observed rotation reaches ∼ 45^∘ (Burn, 1966). Here, the least depolarization would be observed if the rotation measures of components 6 and 7 were ±2.1 × 10^4 rad m^{−2}. Even then, the predicted fractional polarizations at 43 GHz would be only ∼ 10%, whereas the observed values are close to 15%. This rules out internal Faraday rotation by material that fills the jet, but Faraday rotation in a sheath or boundary layer is still a possibility. Inoue et al. (2003) reached the same conclusion for the gradient observed by Asada et al., and the same argument can be applied to Taylor & Zavala’s observations.

5. FARADAY DEPOLARIZATION IN THE CORE

No linear polarization is detected from the core component D in these observations. The limits are 0.2% at 43 GHz, and 1% at 86 GHz. The high rotation measures observed less than 1 milliarcsecond downstream from component D suggest that it is depolarized by differential Faraday rotation. This could be internal to the jet, but we favor an external screen because it is a natural extension of the screen that causes the Faraday rotation in front of components 6 and 7. If the intrinsic polarization of component D is m_0, and the variance in rotation measure along different lines of sight to component D is σ^2_{RM} , the observed polarization is given by m(λ) = m_0 exp(−2σ^2_{RM}λ^4) (Burn 1966). We do not know the value of m_0, but a plausible range is from 0.7% to 7.0%, since this is the range of polarizations observed by Nartallo et al (1998) at 270 GHz using the JCMT. The corresponding minimum values for σ_{RM} are 1.6 − 8.0 × 10^4 rad m^{−2}. (The first value is derived from the 43 GHz measurement.) We cannot be certain that the 270 GHz measurements by Nartallo et al (1998) actually refer to our component D. But if they do, we can derive an upper limit on σ_{RM} from the requirement that the core is significantly polarized at 270 GHz: σ_{RM} < 10^6 rad m^{−2}.

Note that this dispersion requires that the scale length for rotation measure fluctuations is smaller than component D itself. Farther out, at 0.9 mas, the fluctuation scale length is larger than the size of components 6 and 7 (or they would show depolarization at 43 GHz) but smaller than the distance between them. Similarly, at 7 mas the fluctuation scale length is larger than the restoring beam but smaller than the width of the jet.

Zavala and Taylor (2001) have also observed large and spatially resolved Faraday rotation in the core region of 3C 273, which they found to be time-variable . At epoch 2000.07, they found a rotation measure of −2.6 × 10^3 rad m^{−2} in the north-east end of this region, near our component D, and +1.9 × 10^3 rad m^{−2} in the south-east end, near the location of our components 6 and 7. Their measurements (which were at 15 and 43 GHz) do not match ours in any obvious way, probably attesting to the variability of this source.

We note that if 3C 273 were at a more typical redshift of, say, z ≃ 1, then components 6 and 7 would appear blended with the core, and could not be separated by current VLBI arrays. Then the apparent "core" would be polarized, and it would be very difficult to measure rotation measures as large as those reported here. Thus 3C 273 may not be unusual in these properties; it is merely closer.

6. CONCLUSIONS

The results presented here demonstrate the value of polarization sensitive VLBI at 86 GHz. In particular, it allows us to probe the jet and its environment even closer to the central engine, and on the smallest available linear scales. It can also reveal very high rotation measures that cannot be seen at longer wavelengths because of source or bandwidth depolarization.

At 86 GHz, 3C 273 reveals two strongly polarized (∼ 16%) components within a milliarcsecond of the core that have rotation measures that differ by ∼ 4.3 × 10^4 rad m^{−2}. This gradient is transverse to the jet direction and it has the same sign but is 2-3 three orders of magnitude larger than the gradients found by Asada et al (2000) and by Zavala & Taylor (2005) at greater distances from the core. Extrapolating such a gradient to the core component readily accounts for its persistent lack of polarization even at 86 GHz.

The lack of depolarization in the jet requires that the Faraday rotation occurs in a region external to the visble jet itself, but presumably close to it. The data suggest that this Faraday rotating region is variable in time as well as spatially, and may be a boundary layer that represents the interaction of the jet with its environment. Rotation measure observations at the highest frequencies therefore offer a new way of exploring this environment.

7. ACKNOWLEDGMENTS

We thank Tingdong Chen for communicating the results of his observations. Radio astronomy at Haystack Observatory is supported by the NSF through the Northeast Radio Observatory Corporation under grant AST-0096454. JFCW has been supported by NSF grant AST-00-98608.

REFERENCES

Abraham, Z. & Romero, G. E. 1999, A&A, 344, 61 Asada, K., Inoue, M., Uchida, Y., Kameno, S., Fujisawa, K., Iguchi, S. & Mutoh, M. 2002, PASJ, 54, L39 Attridge, J. M. 2001, ApJ, 553, L31 Attridge, J. M., Greve, A., & Krichbaum, T. P. 1999b, in 2^{nd} Millimeter-VLBI Science Workshop, ed. A. Greve & T. P. Krichbaum (Grenoble: IRAM), 13 Burn, B. J. 1966, MNRAS, 133, 67 Cotton, W. D. 1993, AJ, 106, 1241 Homan, D. C., Ojha, R., Wardle, J. F. C., Roberts, D. H., Aller, M. F., Aller, H. D., & Hughes, P. A. 2001, ApJ, 549, 840 Homan, D. C., Ojha, R., Wardle, J. F. C., Roberts, D. H., Aller, M. F., Aller, H. D., & Hughes, P. A. 2002, ApJ, 568, 99 Inoue, M., Asada, K. and Uchida, Y. 2003, in Radio Astronomy at the Fringe, eds. Zensus, J. A., Cohen, M. H. & Ross, E. (ASP Conference Series, Vol. 300, Astronomical Society of the Pacific, San Francisco) Kritchbaum, T. P. & 23 co-authors, 1990, A&A, 237, 3

Lister, M. L., & Smith, P. S. 2000, ApJ, 541, 66 Nartallo, R., Gear, W. K., Murray, A. G., Robson, E. I. & Hough, J. H. 1998, MNRAS, 297, 667 Ojha, R., Homan, D. C., Roberts, D. H., Wardle, J. F. C., Aller, M. F., Aller, H. D., & Hughes, P. A. 2004,ApJS, 150, 187 Pollack, L. K., Taylor, G. B. & Zavala, R. T. 2003, ApJ, 589, 733 Roberts, D. H., Wardle, J. F. C., & Brown, L. F. 1994, ApJ, 427, 718 Taylor, G. B. 1998, ApJ, 506, 637 Taylor, G. B., & Myers, S. T. 2000, “Polarization Angle Calibration Using the VLA Monitoring Program,” VLBA Memo #26 Zavala, R. T. & Taylor, G. B. 2001, ApJ, 550, L147 Zavala, R. T. & Taylor, G. B. 2003, ApJ, 589, 126 Zavala, R. T. & Taylor, G. B. 2004, ApJ, 612, 749 Zavala, R. T. & Taylor, G. B. 2005, ApJ, accepted, astro-ph/0505357