arXiv:astro-ph/0509645v1 19 Sep 2005

Astronomy & Astrophysics manuscript no. intb January 13, 2018 (DOI: will be inserted by hand later)

GMRT observations of the field of INTEGRAL X-ray sources- I

M. Pandey^1, R. K. Manchanda^2, A. P. Rao^3, P. Durouchoux^4, Ishwara-Chandra^3

1 Department of Physics, Mumbai University, Mumbai - 400 098 2 Department of Astronomy and Astrophysics, TIFR, Colaba, Mumbai -400005 3 NCRA, TIFR, Post Bag 3, Ganeshkhind, Pune - 411 007 4 CNRS FRE 2591/CEA Saclay, DSM/DAPNIA/SAP, F-91191 Gif sur Yvette Cedex, France

Received ; accepted

Abstract. The INTEGRAL observatory has discovered a variety of hard X-ray sources in the Galactic plane since its launch. Using GMRT, we have made repeated observations of these sources to search for the radio counterparts of seventeen of them at low frequencies. The source positions were taken from the various ATEL and IAUC reporting their discovery. Possible radio counterparts for seven of these sources namely, IGR J06074+2205, IGR J15479−4529, IGR J16479−4514, IGR J17091−3624, IGR J18027−1455, IGR J18539+0727 and IGR J21247+5058 were detected within 3σ of the position uncertainty derived from the INTEGRAL observations. The offset in the radio position was calculated using the positions mentioned in the ATEL. We have also analyzed the available NVSS images for a few of these fields at 1.4 GHz along with our observations. In this paper we present the radio images and the best fit positions for the positive detections. The X-ray variability for few of the sources within the time scales of 100 s to 1 ks as seen in the RXTE/PCA light curves suggests their Galactic origin and possible binary nature. We discuss briefly the characteristics of these sources from the available information at different wave bands.

Key words. stars : X-ray binaries - X-ray : galaxies - Techniques : interferometry - X-ray : sources : INTEGRAL sources

1. Introduction

Since its launch in Oct 2002 the International Gamma Ray Astrophysics Laboratory, (INTEGRAL), has discovered a number of new hard X-ray/ soft γ-ray sources^1 within the Galactic plane mainly towards the Galactic center region. These sources were discovered with the IBIS instrument, which has a large field of view of 29^∘ ×29^∘ and a sensitivity up to 1 MeV (Lebrun et al. 2003). Most of these new Galactic sources are soft gamma-ray emitters in the 20 −− 100 keV energy range and have been identified as Xray binary systems (XRBs) (Bird et al. 2004).

The Galactic XRBs sources are accreting binary systems with black hole (BH) or neutron star (NS) as the compact object. Apart from persistent X-ray emission from a number of these binaries, a large fraction of these systems are transient in nature, which brighten up on occasion, sporadically and each source has some unique characteristics. Since observations of superluminal outflows during the transient burst of GRS 1915+105 (Mirabel &

Send offprint requests to: M. Pandey : mamta@ncra.tifr.res.in 1 See http://isdc.unige.ch/∼rodrigue/html/igrsources.html for an updated information on the list of all INTEGRAL sources

Rodríguez, 1994), a new subclass, characterized by the presence of jets in X-ray binaries, has been established. The radio observations of some of these Galactic sources during quiescent and flaring modes using radio interferometers suggest their morphology is similar to quasars, hence they are named as microquasars. A compact core and two sided radio jets have been commonly observed in these sources during VLBI observations(Mirabel et al. 1999). In most of these sources a compact object is believed to be a black hole candidate (BHC); however, for Sco X-1, CI Cam and Cir X-1, the compact companion is determined to be a neutron star. Interesting variability pattern in the radio light curve were seen for GRS 1915+105 (Mirabel et al. 1994, 1997, 1998). The X-ray emission from this source has also revealed a rich class of flux variability and temporal features (Belloni et al. 1997).

We have been carrying out a programme of monitoring of the new INTEGRAL sources since Aug 2003 with the Giant Metrewave Radio Telescope, (GMRT) with a view:

1. to map the field of new X-ray sources at low frequencies in order to find the radio counterparts and provide the exact position coordinates with the arcsec resolution of GMRT at meter wavelength.

2 M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I

Table 1. List of target INTEGRAL sources observed with GMRT

Source Type Integral Variable X-ray X-ray GMRT Pos. Unc 100 s-1 ks Flux State detection 1.6σ IBIS/ISGRI (mCrab) during within X-ray 15 −− 40 keV GMRT obs. 3σerror box IGR J06074+2205 - 2^′ Yes 15 high soft Yes IGR J15479−4529 - 2^′ Yes 2 - Yes IGR J16316−4028 - 3^′ Yes 25 - Yes IGR J16318−4848 sgB(e)(HMXB) 4^{′′} Yes 50-100 high soft No IGR J16320−4751 HMXB(?) 4^{′′} Yes 10-50 - No IGR J16418−4532 - 2^′ - 2 - No IGR J16479−4514 3^′ Yes 12 high soft Yes IGR J17091−3624 XB^1(BHC) 0.8^′ Yes 40 low hard Yes ? - - - IGR J17391−3021 Be/(NS)HMXB^2 1^{′′} Yes 150 - No ? Chandra - IGR J17544−2619 HMXB(?) 4^{′′} Yes 60 high soft No IGR J17597−2201 Neutron Star, LMXB 2^′ Yes 5 - No IGR J18027−1455 - 2^′ Yes - high soft Yes IGR J18325−0756 - 2-3^′ Yes - - No IGR J18483−0311 - 2^′ Yes 10 - No IGR J18539+0727 XB^3 3^′ Yes 20 low hard Yes (BHC) - IGR J19140+0951 LMXB^4 1.3^′ Yes 50−−100 high soft No (BHC) - IGR J21247+5058 Radio Galaxy 2^′ Yes - low hard Yes 2M. Revnivtsev et al. 2003a^1 , Smith et al. 2003^2 , M. Revnivtsev et al. 2003b^3 , Schultz et al. 2004^4

2. to derive a possible association of the source by combining the radio, infrared and X-ray data and to establish the nature (low mass X-ray binary (LMXB) or high mass X-ray binary (HMXB)) of the source based on the magnitude of any infrared counterpart. Both these systems have NS or BH as one of the component. In the case of HMXB the other component is a massive star, usually a Be star or a blue super-giant of ∼ 8 −− 20 M⊙. And for LMXBs the second component (donor) is a main sequence star. In some cases the donor can either be a degenerate or a evolved (subgiant or red giant).

3. to distinguish the Galactic (compact) and extragalactic (extended) sources based on their statistically known radio morphology.

The radio data at different frequencies can help in unveiling the nature of these new sources and physics underlying the emission/absorption processes (Revnivtsev et al. 2003a).

In this paper we report the results obtained from radio observations performed on seventeen new sources with GMRT at 0.61 GHz and 1.28 GHz. The selection criteria applied for possible radio-X-ray association discussed below is derived from our rigorous study of the known XRBs and BH jet sources. This was initiated in 2001 using GMRT (Pandey et al. 2004) with a view to establish the long term spectral behavior of these sources at radio frequencies in correlation with their X-ray properties.

The selection criteria for a genuine and possible radio- X-ray association of the X-ray sources is as follows:

1. The number of extragalactic sources with flux densities above 2.5 mJy in the sky at 0.61 GHz in 10^′ × 10^′ area is typically ∼ 5 whereas the number of sources expected above the flux density of 1.1 mJy in 10^′ × 10^′ area at 1.28 GHz is typically ∼ 2 (Condon et al. 1999). The number of sources decrease with: (i) the increase in flux density and (ii) decrease in the field area. The above source counts (number of sources) are used as typical limit for the extragalactic sources in the given area. The number of sources above this limit in the given area are considered as Galactic sources. The occurance of number of Galactic radio sources in the field of INTEGRAL source within the X-ray position error circle is statistically higher in number as compared to extragalactic radio sources. Also this source counts varies from the Galactic center to further away along the Galactic plane with lower probability in the latter region.

2. The X-ray binaries have compact radio morphology with the radio emission being non-thermal in origin. The variability in the radio flux density is a prominent feature in these sources. The radio spectra of microquasars show flattening or power law decay at high radio frequencies with radio emission coming from the jet, e.g. GRS 1915+105, SS433, Cyg X-1, and spectral turnover at low radio frequencies with radio emissions coming from the radio lobe (Ishwara-Chandra et al.

M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I 3

2004). The radio emission is quenched when the source is in high soft X-ray state. Also the radio emission from few of these sources are synchrotron self absorbed below 1.28 GHz, e.g. X1812−121, XTE J1720−318, 1E1740.7−294 (Pandey et al. 2004). The X-ray characteristics include prominent fluorescent emission from the iron line at 6.4 keV and a hard X-ray tail showing rapid variability of the order of ∼ 10 −− 100 s. The infrared and optical counterparts are associated with the X-ray binary source. The infrared emission originates from circumstellar disks undergoing major expansion coincident with phases of X-ray activity and the evaporation of the disk material due to heating gives rise to optical emission. Thus a compact radio source within the 3σ X-ray position uncertainty limit satisfying the above criteria is very likely to be associated with the Galactic X-ray source.

3. The radio sources with extended radio morphology and with their radio emission being non-thermal in origin have spectral index, α ∼ −0.7 (S_ν =ν^α), are classified as extragalactic radio sources. Their radio emission is mostly non variable. The X-ray light curve shows variability on larger timescales; however, variability of the order of ∼ 100 s is reported for few extragalactic sources. Thus a radio source within the 3σ X-ray position uncertainty limit satisfying the above criteria is most likely not associated with the Galactic X-ray source.

The observations on these seventeen sources presented here were made in the Aug 2003 observation cycle with GMRT. Further observations of 23 sources belonging to this class were conducted in Aug 2004 and the data analysis is in progress. The target sources are those discovered during the INTEGRAL observation scans on the Galactic plane, and during guest observations and Crab calibrations; they are listed in Table 1.

2. Observations and Analysis

The radio observations were carried out at 0.61 GHz and 1.28 GHz with a bandwidth of 16/32 MHz using the GMRT (Swarup 1991). The Half power beam width for the GMRT antenna at 0.61 GHz is ∼ 43^′ and at 1.28 GHz is ∼ 26^′. The measured position offset of the possible GMRT radio counterparts with respect to the X-ray sources is below ∼ 5^′ , hence primary beam corrections do not contribute a significant change to the images. The gain decreases significantly in the field at low radio frequencies, i.e 0.61 GHz, hence gain depression corrections or system temperature corrections were applied to the flux densities of the radio counterparts. The flux density scale was set by observing the primary calibrators 3C286, 3C147 and 3C48. Phase calibrators were observed near the target source for ∼ 5 min scans interleaved with 25 min scans on the INTEGRAL sources. The sample time was 16 s. The data recorded from GMRT were converted into FITS files and analyzed using the Astronomical Image Processing

System (AIPS). A self calibration on the data was performed to correct for phase related errors and improve the image quality. 7 −− 10% of the data was affected by interference and was carefully removed. Ionospheric scintillation effects were not seen on the 0.61 and 1.28 GHz data during our observations. Possible radio counterparts were detected for seven out of seventeen sources and for other sources no possible radio counterpart was detected within the 3σ error box of the X-ray source. Table 2 summarizes our results for the new sources along with best-fit radio positions for the counterpart and the position offsets of this counterpart with respect to the X-ray positions. Column 4 gives the peak and total flux density for the point and extended source respectively. The rms noise given in column 5 of Table 2 corresponds to the average background noise in the image field and is higher in the Galactic plane. In the radio images presented below, the boxes show the known field sources (X-ray, gamma-ray, optical, infrared, radio) from the files available from the NASA extragalactic Database (NED), 2MASS and Digital Sky Survey (DSS). The number of infrared and optical sources expected within a 10^′ area in the Galactic region was derived from the image obtained from FITS files available from the 2MASS and DSS surveys at: http://skys.gsfc.nasa.gov/cgi-bin/skvadvanced.pl. The expected number of infrared and optical sources are ∼ 6 and ∼ 1.2 respectively; however, in the radio images shown in this paper, only the sources in close proximity to the radio source have been marked. We also discuss briefly the spectral properties in the radio band (non-simultaneous radio observations) of the radio counterparts on which other data are available. The bold circle marked with ‘A’ only indicate a possible GMRT radio counterpart close to the X-ray source. We have grouped sources with a genuine radio-X-ray associations, no associations and no radio information, based on our results in Sec. 3.

3. Results

Imaging at radio wavelengths are specially important since interferometry has the intrinsic capability to provide a precise sub-arcsec position measurements, thus improving the error boxes obtained from X-ray data. In addition, interstellar extinction has very little effect at low radio wavelengths.

3.1. X-ray sources with a radio source in the field and radio-X-ray association:

IGR J17091−3624 : This microquasar was discovered at a flux density level of ∼ 20 mCrab between 40 and 100 keV (Kuulkers et al. 2003). BeppoSAX detected the source at a flux density level of 14 −− 20 mCrab in the 2 −− 10 keV band, suggesting a very steep photon spectrum consistent with a spectral index of 3.0±0.4 or kT = 4.3±1.4 keV from the thermal bremsstrahlung (Zand et al. 2003). During a 3 ks observation of the source with RXTE/PCA in the 2 −− 20 keV band, the observed flux density was ∼ 4 mCrab.

4 M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I

The X-ray light curve of the source shows a large variability on time scales from several tenths to several tens of seconds. The energy spectrum of the source fitted a power law index of 1.43± 0.03. No visible absorption was detected at the lower energies (Lutovinov & Revnivtsev 2003). The combined X-ray data from BeppoSAX and INTEGRAL also suggest a variable nature of the source with flare episodes in Apr 2003 and Sep 2003 (Kuulkers et al. 2003). The radio emission from the source region was detected during observations with the Very Large Array (VLA) at 4.9 GHz with a flux density of 1.8±0.3 mJy and they showed significant variability in flux density (Rupen et al. 2003a).

Fig. 1. GMRT image of IGR J17091−3624 at 1.28 GHz with the INTEGRAL position marked with +. The small and large circles shows the INTEGRAL uncertainty error circles of 1.6σ and 3σ. The bold circle marked with ‘A’ show the radio source detected by GMRT. The boxes show the known field sources, B: NVSS 17092−3624, C: DSS J170901−3623 and D: 2MASS J170902−3623

In our observation with GMRT, a radio source was detected within the 1.6σ position uncertainty of the Xray sources at a radio flux density of 1.10±0.16 mJy at 1.28 GHz, at a J2000 position of RA: 17h 09m 02.3s and DEC: −36d 23^′ 33^{′′}. The rms noise was 0.19 mJy b^{−1}. The flux density at 0.61 GHz was measured to be 2.50±0.73 mJy.

The GMRT image of the field is shown in Fig. 1. The source morphology is consistent with a point source. The compact nature of the radio source is also inferred from the gaussian fit to the source flux density using the AIPS routine ‘JMFIT’. In our analysis of the NVSS FITS files, we have detected a weak radio source with a flux density of ∼ 1.50±0.25 mJy at the same position.

Fig. 2. Radio spectrum for IGR J17091−3624.

The radio source marked ‘A’ in the figure lies within the INTEGRAL position error circle of the source and is the most likely radio counterpart of the X-ray source. The GMRT (A) and NVSS (B) radio counterparts are coincident in position. The infrared source, (D) and the optical source, (C) coincide in position with the radio source. Thus we confirm that the source (B), (C) and (D) are associated with the X-ray binary source. It is reasonble to think that the infrared emission comes from a circumstellar disk undergoing major expansion coincident with phases of X-ray activity and the optical emissions are due to heating and evaporation of the disk material. In order to enhance the significance of the possible association of the GMRT source with the X-ray object, we have plotted the radio flux density measurements of the source region at GMRT frequencies of 0.61 and 1.28 GHz in Fig. 2. The observed flux density values for the NVSS source at 1.4 GHz and VLA flux density value at 4.9 GHz are also plotted in the figure for reference. However, it should be noted that the observations are non-simultaneous. The spectral fit to the GMRT data corresponds to the falling power law of the form (S ∝ ν^α) with α = −0.62. This is consistent with the radio emission from the other X-ray binary sources. It should be noted that if the high frequency observations are associated with the same emission region, the radio spectral fit will require a clear turn around to positive slope with α = +2.73. This suggests a composite of two separate radio emitting regions for the source.

IGR J18027−1455 : This source is an AGN candidate located in the Norma arm region (Walter et al. 2004, Masetti et al. 2004). A faint ROSAT X-ray source

M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I 5

1RXS J180245.5−145432, lies well within the IBIS/ISGRI error circle. Two weak radio sources were discovered in the NVSS field at 1.4 GHz (Combi et al. 2004, Ribo et al. 2003). The first source, NVSS J180239−145453, located at J2000.0 ICRS position of RA: 18h 02m 39.94s(±0.25s), DEC: −14d 54^′ 53.6^{′′}(±3.3^{′′}) and 0.51 arcmin away from the X-ray source has a flux density of 6.9 mJy. This object has an infrared counterpart 2MASS J180239−145453. The second source, NVSS J180247−145451 at J2000.0 ICRS position of RA: 18h 02m 47.37s(±0.13s), DEC: −14d 54^′ 51.6^{′′}(±2.2^{′′}) is located 0.28 arcmin away from the X-ray position and has a flux density of 10.5 mJy. The field is further complicated by the presence of an extended IR source, 2MASXi J1802473−145454, with coordinates RA: 18h 02m 47.3s, DEC: −14d 54^′ 55^{′′} and magnitudes J = 13.18, H = 12.02, K = 10.94, within the 2σ position error ellipse of the second radio source. The average optical magnitudes of this IR source are B = 19.3, R = 14.9 and I = 13.8 in the USNO-B1.0 catalog. The source has an optical counterpart DSS J180241−145453. The sources NVSS J180247−145451 and NVSS J180239−145453.6, 2MASXi J1802473−145454, DSS J180241−145453 and 1RXS J180245.5−145432 are therefore, the equally likely counterparts of IGR J18027−1455. The GMRT

Fig. 3. GMRT image of IGR J18027−1455 at 0.61 GHz with the INTEGRAL position marked with +. The small and large circles shows the INTEGRAL uncertainty error circles of 1.6σ and 3σ. The bold circle marked with ‘A’ shows a radio source detected by GMRT. The boxes show known field sources, B: 1RXS J180245.5−145432, C: NVSS J180247−145451, D: DSS J180241−145453, E: NVSS J180239−145453.6 and F: 2MASS J180239−145453.

observations were made at 0.61 GHz and image of the field is shown in Fig. 3. It is seen from the figure that GMRT data did not yield any significant flux from the directions of NVSS J180239−145453 (E), 2MASS source (F) or ROSAT (B) source position. The only point radio source seen (A), in the GMRT data was at a flux density of 10.72±2.25 mJy and is coincident with the NVSS source J180242−145049. The GMRT position for the radio source is RA: 18h 02m 42.75s and DEC: −14d 50^′ 49.21^{′′} with position offset 4.18^′ with respect to the INTEGRAL position. The rms noise was 2.3 mJy b^{−1}, and the NVSS flux density for the source is 12.3 mJy. With the detection of higher flux density at 0.61 GHz compared with NVSS data, we can infer that NVSS J180242−145049 is a flat spectrum source in the 0.61 GHz to 1.4 GHz range, assuming the source is persistent in nature.

Non detection of the 2 radio sources closest to the INTEGRAL X-ray source position during our observations, suggests that the radio sources show spectral turnover at low frequencies or are variable in nature. However in both the cases, a non-thermal origin of the radio emission is clearly favoured. Thus considering the NVSS flux density at 1.4 GHz for the source NVSS J180247−145451 and the upper limit of <7 mJy from GMRT observations at 0.6 GHz, the spectral index derived is, α = −0.46, typical for binary jet sources. The RXTE/ASM light curve for the hardness ratio of the X-ray source suggests that it was in a high soft state during our observations. Thus, NVSS J180247−145451 and NVSS J180239−145453.6 are the radio counterparts of the X-ray source. The non-detection of NVSS J180239−145453 (E) and NVSS J180247−145451 (C) with GMRT in May 2004 and a clear detection in the NVSS survey is consistent with the binary nature of the X-ray source. However very recent observation of IGR J18027−1455 region with the GMRT (2nd Mar 2005) shows an evolution of the previous trends followed by the source in the radio regime. We have detected radio emissions at 0.61 GHz in the direction of the INTEGRAL source and coincident in position with the NVSS (E) and (C) sources; see Fig. 3. The radio morphology reveals the presences of radio lobes. The (E) and (C) sources have GMRT flux densities of 9.00±0.33 and 5.00±0.35 mJy, respectively. A clear low frequency radio variability is established for the source via our observations. The ASM light curve for the source shows a flaring episode during MJD 53350 −− 53360 i.e 1st −− 11th Dec 2004. This enhances the significance of the radio–X-ray association.

IGR J18539+0727 : This source was discovered with the IBIS/ISGRI detector in Apr 2003 (Lutovinov et al. 2003). With the measured photon fluxes of 20 mCrab between 15 and 40 keV and ∼ 20 mCrab between 40 and 100 keV, IGR J18539+0727 has the most unusual flat spectrum among the known X-ray sources in hard X-ray band. In a later observation of the source with RXTE/PCA, an average flux density level of ∼ 6 mCrab was found with large variability on time scales from milli-seconds to seconds, but without any prominent features associated with

6 M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I

quasi-periodic oscillations (QPO). The energy spectrum of the source fits a power law with spectral index ∼ −1.5, and appreciable low energy attenuation due to neutral hydrogen of n_H ∼ (1.5 ± 0.4) × 10^{22} and a fluorescent iron emission line at 6.4 keV. The observed spectral and temporal characteristics of the X-ray source fits well with the standard model of AGNs (Ceballos et al. 2004).

Fig. 4. Top fig shows the GMRT image of IGR J18539+0727 at 1.28 GHz with the INTEGRAL position marked with +. The circle shows the INTEGRAL uncertainty error circle of 1.6σ. The bold circle marked with ‘A’ shows the radio source detected by GMRT. Below fig shows the blown up image of GMRT radio counterpart. The boxes show the known field sources, B: 2MASS J18535+0731, C: DSS J18535+07315, D: 2MASS J185352+07305, E: 2MASS J185353+07305 and F: DSS J185353+07305

During GMRT observations of the field, a fully resolved double point source with a flux density of ∼ 5.25±0.25 mJy and ∼ 5.85±0.50 mJy was detected from the J2000 position of, RA: 18h 53m 52.54s±0.03 and DEC: +07d 30^′ 39.07^{′′}±0.43 and RA: 18h 53m 52.19s±0.023 and DEC: +07d 30^′ 37.31^{′′}±0.32, respectively, which lies within the 1.6σ position error circle of 3^′ of the X-ray source. The radio morphology resembles IGR J18027−1455 or an AGN. The computed position offset from the field center is 3.82^′ and 3.64^′ respectively as shown in Fig. 4. The GMRT source is coincident with the NVSS unresolved radio source in the field, for which the flux density is estimated as ∼ 6 mJy at 1.4 GHz. The radio flux density measurements, although done at different epochs is consistent with a flat spectrum source between 1.28 and 1.4 GHz and its persistent nature. Fig. 4 also shows the 2MASS J18535+0731 (infrared, E) and DSS J18535+07315 (optical, C) coincident in position with the radio source, thus suggesting a possible association with the radio source. A power law X-ray spectrum with a strong photoabsorption at low energies and fluorescent iron emission line at 6.4 keV clearly points to a binary nature of IGR J18539+0727, in which the emission may arise due to the reflection of the hard X-radiation of inner accretion-flow regions from an optically thick, cold accretion disk. Furthermore, the power density spectrum of the source shows a cutoff below a frequency of ∼ 0.01 Hz, which places it in the compact companion to a BHC category (Van der Klis et al. 1999). The presence of infrared and optical counterparts also supports the disk-jet morphology. Thus the hard Xray source is associated with the radio counterpart detected by GMRT and we conclude from our result that IGR J18539+0727 is an AGN.

3.2. X-ray sources with a radio source in the field and no radio-X-ray association:

IGR J06074+2205 : The transient X-ray source IGR J06074+2205 was detected with a flux density of ∼ 7 mCrab between 3 and 10 keV by INTEGRAL (Chenevez et al. 2004). The hardness ratio derived from the RXTE/ASM light curve suggests that the source was in a high state during our observations. The EGRET source 3EG J0617+2238 lies close to the X-ray source; however, it is likely to be associated with the SNR IC443 (Torres et al. 2003). GMRT observations for the source were made on 4 occasions during Feb −− May 2004 and a radio source was discovered within the INTEGRAL position uncertainty limit, of 1.6σ (∼ 2’).

Fig. 5. shows the GMRT radio image of the IGR J06074+2205 field at 0.61 GHz with a source with a flux density level of ∼ 80 mJy close to the X-ray source position (offset of 1.29^′ with respect to the INTEGRAL position). The compact nature of the radio source is inferred from the gaussian fit to the source. The GMRT position coordinates are (J2000) RA: 06h 07m 18.45s and DEC: +22d 04^′ 52.49^{′′}. The source was also detected at 1.28 GHz by

M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I 7

Fig. 5. GMRT image of IGR J06074+2205 at 0.61 GHz with the X-ray source position in the center marked with + . The large circle represents the INTEGRAL uncertainty error circle of 1.6σ. The bold circle marked with ‘A’ shows the radio source detected by GMRT. The box indicates the known NED field source, A: NVSS J060718+220452, B: DSS J060722+220500, C: 2MASS J060722+220453, D: DSS J060727+220453 and E: 2MASS J060727+220445

GMRT on 1st Feb 2004 at a flux density of ∼ 36 mJy. An observation of this region with the Ryle Telescope at 15 GHz on 29th Jan 2004, 3 days before our observations, showed an unresolved flux density of 4.0±0.2 mJy, at the NVSS J2000 position (Pooley 2004). The positive detection of the source at different epochs with GMRT at 0.61 GHz clearly suggests a persistent nature for the source in the radio region. The source has shown small variability in the radio flux density.

In the Fig. 6, we have plotted the radio spectrum of the source using all available data. It is seen from the figure that the data can be represented by a power-law of the form (S_ν ∼ ν^α). The spectral index at higher frequencies is derived as −0.70±0.08. A power-law nature of the radio spectrum is typical for a non thermal emission arising from optically thin medium similar to that produced in the jets interacting with the ambient medium, as seen in extragalactic sources. The hypothesis of a continuous jet can also lead to the X-ray emission in the hard X-ray band due to inverse comptonization of thermal disk photons by a corona (e.g. Markoff & Nowak 2004). Fig. 5 also shows infrared (2MASS J060727+220453, C and 2MASS J060727+220445, E) and optical (DSS J060727+220453, D and DSS J060722+220500, B) sources present in the 1.6σ error circle lying close to the X-ray source and thus showing no possible association between the radio and the infrared/optical sources.

Fig. 6. Radio spectrum for IGR J06074+2205

IGR J15479−4529 : This source was discovered by INTEGRAL in Feb, 2003 observations of Black Hole Candidates (BHC) 4U 1630−47 at a flux density level of ∼ 3 mCrab between 20 and 40 keV (Tomsick et al. 2004). An X-ray source 1RXS J154814.5−452845, which lies at the distance of 3^′ from IGR J15479−4529 has been detected during XMM-Newton observation of the source field in the energy range below 10 keV (Haberl et al. 2002).

During the GMRT observation, a radio source with a total flux density of 22.2 mJy was detected within the position error box of 3σ of the hard X-ray source and is shown in Fig. 7. The GMRT position of the source is (J2000), RA: 15h 47m 44.26s and DEC: −45d 32^′ 35.22^{′′}. The rms noise in the GMRT data was 0.5 mJy b^{−1} in the source direction. The position offset with respect to the INTEGRAL position is 3.98^′. The radio morphology of the source suggests that the source is extended in nature. No NVSS image is available for comparison to our measurement. In the absence of RXTE/ASM light curve, it is difficult to comment whether the X-ray source was in the high soft or low hard state during our measurements.

It is seen from the figure that the position coordinates of the radio source do not coincide with those of IRXS J154814.5−452845 (D) but they coincide with those of the infrared (2MASS J1547−4532, C) and optical (DSS J1547−4532, B) sources in position, thus suggesting a possible association of the radio and optical/infrared sources. From the above information we conclude that the radio source is not associated with the X-ray source. Since the X-ray counterpart is expected to fall in 90% of the INTEGRAL position error circle, i.e, within a distance of 1.6σ, this X-ray source may be a possible candidate for further observations to look for counterparts.

8 M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I

Fig. 7. GMRT image of IGR J15479−4529 at 1.28 GHz with the INTEGRAL position marked with + in the centre. The small and large circles in the figure represent the INTEGRAL position uncertainty error circles of 1.6σ and 3σ. The bold circle marked with ‘A’ shows the radio source detected by GMRT. The boxes show the known NED field sources, B: DSS J1547−4532, C: 2MASS J1547−4532 and D: IRXS J154814.5−452845

IGR J16479−4514 : is a weak hard X-ray transient source with an observed flux density of ∼ 8 mCrab between 25 and 50 keV (Molkov et al. 2003). The EGRET source 3EG J1655−4554 (Romero et al. 1999) is located close to the X-ray source. The RXTE/ASM hardness ratio suggests that the source was in a high soft state during our observations. The ASM light curve for the source shows that the X-ray flux density between 1st Jan and 28th Feb 2003, was relatively constant though irregular large random spikes were seen.

During our observations with GMRT in Feb 2004, a bright radio source was detected within the INTEGRAL position uncertainty limit of 1.6σ. The flux density recorded at 1.28 GHz is ∼ 2.50 Jy with the rms noise of ∼ 1.24 mJy. Fig. 9. shows the 10^′ image of the field of IGR J16479−4514.

The position offset is 3.30^′ with respect to the X-ray source position. The radio position of the source is (J2000) RA: 16h 47m 47.75s and DEC: −45d 17^′ 07^{′′}. There is no NVSS image of the field. Radio morphology of the source suggests it is an HII region. While photoelectric effect heats the gas in compact HII region leading to ionized hydrogen, the dominant cooling process is mainly through recombination giving rise to the free-free radio emission. Thus radio emission from this source should be thermal

Fig. 8. GMRT image of IGR J16479−4514 at 1.28 GHz with the INTEGRAL position marked with + . The circle shows the INTEGRAL uncertainty error circles of 1.6σ. The bold circle marked with ‘A’ shows the radio source detected by GMRT and the box shows the known field source, B: 2MASS J164745−451653

in nature. The infrared source, 2MASS J164745−451653 (B) coincides in position with the radio source. Due to the extended nature of the radio source we conclude from our observations that the radio and infrared source are not associated with the Galactic X-ray source.

IGR J21247+5058 : This source was discovered in the Norma arm region (Walter et al. 2004). The X-ray source has been identified with the core of a bright radio galaxy, 4C 50.55, also known as GPSR 93.319+0.394, KR2, NRAO 659 or BG 2122+50 (Ribo et al. 2003) and is also coincident with the IR source 2MASS 21243932+5058259. The optical spectrum of the source is very peculiar, having a broad hump around 6700 Åof Hα line typical of elliptical or spiral bulge (Barth et al. 2001). While the observed Na, Ca and Mg features are consistent with redshift z = 0, the identification of the value of Hα feature leads to a redshift z = 0.020 ± 0.001. In addition, the photometric magnitudes indicate an increased reddening from R to near infrared band. It is therefore proposed that the observed spectral features in the optical band are caused by the chance alignment of a F-type star with the radio galaxy (Masseti et al., 2004). The radio observations of the region with GMRT were carried out on 4 occasions between Apr −− May 2004. The observation details are listed in Table. 2. The radio flux density of ∼ 160 mJy at 0.61 GHz was observed on each occasion from the core (Table. 2).

M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I 9

Fig. 9. A high resolution GMRT image of IGR J21247+5058 at 0.61 GHz. The core is marked with ‘A’. The X-ray position is marked with +. The boxes show the known field sources, B: 2MASS J2124+5058, C: NVSS 21247+5058, D: 28P206, E: MG4 J2124+5058, F: *87GB 2122+5046, G: 7C 2122+5047, H: NRAO 0659, I: *87GB 2123+5044, J: *87GB 2123+5043, K: MG4 J212511+5056

In Fig. 9 we have plotted the high resolution GMRT image of the source along with the other radio sources detected in this region in previous surveys. It is seen from the figure that morphology of the GMRT radio image clearly resembles that of a radio galaxy having a bright core marked ‘A’ and extended radio lobes. However, it is seen from the figure that the field is very complex and contains multiple objects within the 3σ position error circle of the INTEGRAL source, and some of them are not seen in the GMRT data. Apart from the GMRT source marked ‘A’, radio sources 28P206 (D) and 87GB212310.9 (I) lie within the 1.6σ position error circle of the X-ray source. However, the alignment of these sources towards the radio lobes clearly suggests that sources (D) and (I) represent regions of radio lobes which were brighter during the respective observations.

The observed GMRT flux density for the radio core varied between 173 mJy to 185 mJy at 0.61 GHz during our four observations, the peak flux densities for the radio lobes was measured to be ∼ 1.8 Jy and ∼ 0.85 Jy. Using NVSS flux density values, for the core and the extended radio lobes, the spectrum for the extended region fit a power law spectrum (S_ν ∝ ν^α) with a spectral index of α ∼ −0.6 which is consistent with the synchrotron emission from a optically thin medium. The spectral index for the radio core is α ∼ 0.5, which clearly points towards an inverted spectrum due to strong absorption in the optically thick medium at low frequencies. Our observation at low frequency (0.61 GHz) with GMRT has revealed the true spectral nature of the core of IGR J21247+5058. The discovery of the X-ray source in the hard X-ray band, the Hα hump in the optical spectrum and its spectral nature in the radio and X-ray bands clearly suggest that IGR J21247−5058 is a partially obscured extragalactic X-ray source similar to NGC1068 and NGC4579.

3.3. Sources with no radio detection:

IGR J16316−4028 : This source was discovered at a flux density level of ∼ 25 mCrab between 20 and 40 keV during the INTEGRAL survey (Rodriguez & Goldwurm 2003). The X-ray source is transient in nature, and variability of the X-ray flux density on timescales of ∼ 2000 s has been observed from the source along with the flaring events during its discovery (Rodriguez et al. 2003). An EGRET gamma ray source 3EG 1631−4033 lies in the field direction at a distance of 10^′ with respect to the source, IGR J16316−4028 (Rodriguez et al. 2003) suggesting a possible association of the two due to large position uncertainty of the gamma ray source. During our observations with GMRT at 0.61 GHz and 1.28 GHz, no radio source was detected within the X-ray position error box of 3σ and upper limits of ∼ 0.8 mJy b^{−1} and ∼ 6 mJy b^{−1} respectively were measured.

IGR J16318−4848 : This transient source was discovered by INTEGRAL in the Norma arm. The observed flux density in the 15 −− 40 keV band was 50 −− 100 mCrab. The X-ray flux data show significant temporal variations on the time scale of 1000 s. A bright 9th mag infrared source in the J, H, K bands, coincident with the X-ray source position is clearly seen in the 2MASS and Mid course Space Experiment (MSX) data. The source is highly absorbed at 8 micron flux density and Galactic in nature (Courvoisier et al. 2003). The best fit position (J2000) determined from the infrared and the XMM measurement corresponds to RA: 16h 31m 48.3s, DEC: −48d 49^′ 01^{′′} (Schartel et al. 2003, de Plaa et al. 2003, Revnivtsev et al. 2003). The infrared and optical observations of the counterpart have revealed the high mass X-ray binary nature of the source, there being a compact, companion around a supergiant primary B[e] star (Filliatre et al. 2004). Strong photo absorption and the fluorescent emission line of neutral iron (6.4 keV) are seen in the XMM data thereby suggesting accretion due to a stellar wind (Matt et al. 2003). A search for the radio emission from the source at 4.8 and 8.6 GHz was made by Walter et al. 2003 with ATCA, but no significant radio flux density was detected from the source with a 1σ upper limit of 0.1 mJy. We made repeated observations at 0.61 GHz using GMRT at various epochs during 2003 and 2004 observing cycles. No positive detection was made in any of these observations. An upper limit of ∼ 7 mJy for the radio emission within the 3σ position uncertainty circle is derived. The typical rms noise in the field is measured to be ∼ 2.2 mJy. A non detection at radio frequencies may be due to the highly absorbed nature

10 M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I

of the source due to its location in the Galactic plane. The present observation may also correspond to high soft state of the source during which the radio emission is believed to be quenched. There is also a possibility of non existence of the radio jet in the source, as in the case of pulsars.

IGR J16320−4751 : The variable hard X-ray source, IGR J16320−4751, was discovered during Feb 2003 (Tomsick et al. 2003). The hard X-ray source position is consistent with that of the source AX J1631.9−4752. The ASCA/GIS observations also suggest a variable nature of the source (Sugizaki et al. 2001a) and its energy spectrum fits an absorbed power law and so it is believed to be a high-mass X-ray binary system. The variations of the spectral index in different observations by XMM-Newton, ASCA and BeppoSAX suggest that the source undergoes a spectral transition similar to those in the other XRBs. The EGRET source 3EG J1639−4702 (Romero et al. 1999) could be associated with the X-ray source considering the large position uncertainties. The infrared images from the 2MASS database and the optical observations indicate a bright and massive companion for the X-ray source (Rodriguez et al. 2003).

GMRT observation of the field did not show any significant radio source within the 3σ position uncertainty limit during different observations at various frequencies. A 3σ upper limit for the radio flux density was ∼ 3 mJy at 1.28 GHz with a rms noise of ∼ 0.83 mJy b^{−1}, while the 3σ upper limit at 0.61 GHz correspond to 4 mJy with rms noise typically ∼ 1.04 mJy b^{−1}. No NVSS data is available for comparison of the field and also there is no RXTE/ASM data to determine the X-ray state of the source during our observation. The non detection of the source at low frequency clearly points out either an absorption of the jet in the ambient medium or a lack of a radio jet.

IGR J16418−4532 : This hard X-ray source was discovered in the IBIS/ISGRI data at the flux density level of ∼ 3 mCrab in the 20 −− 40 keV bands (Tomsick et al. 2004). The X-ray source is located in the Norma arm region. The GMRT observations at 0.61 GHz were made in Feb 2004, to search for the radio counterpart of the X-ray source. No significant radio flux density was detected within the INTEGRAL position uncertainty limit of 2^′. The 3σ upper limit is 1 mJy at 1.28 GHz with a rms noise of ∼ 0.33 mJy b^{−1}. No RXTE/ASM X-ray light curve or the NVSS image is available. Thus suggesting a non existence of the radio emission from the X-ray source during our observations.

IGR J17391−3021 : Hard X-ray emission in the 18 −− 50 keV bands from the transient HMXB source, IGR J17391−3021, was discovered in Aug 2003 at a flux density level of ∼ 70 mCrab (Sunyaev et al. 2003a). The position coordinates of the source overlap with the X-ray source XTE J1739−302 with J2000 position of, RA: 17h

39m 11.1s and DEC: −30d 20^′ 37^{′′}. Using CHANDRA observations, the position has been refined to 1^{′′}. Within the improved position, an optical counterpart of the source is identified with the object 0525 28760590 in the USNO A2 catalog. It is also a 2MASS source and is a highly reddened O star (Smith et al. 2003). A radio source was detected in a VLA observations at 4.9 GHz at a flux density of 0.9±0.2 mJy, and a J2000 position of, RA: 17h 39m 01.52s and DEC: −30d 19^′ 34.9^{′′} within 3^′ error circle INTEGRAL position but well outside the CHANDRA error circle (Rupen et al. 2003b). The EGRET source 3EG J1736−2908 is located near the X-ray source.

The source was observed with GMRT at 1.28 GHz and no radio emission was detected from the field within 3σ position uncertainty of 2^{′′}, as determined from CHANDRA data. The 3σ upper limit for the radio flux density from GMRT data is ≤ 1 mJy and the rms noise was 0.2 mJy b^{−1}. No significant radio flux from the X-ray source position was detected in the analysis of the NVSS data and the 3σ upper limit for the radio flux density is derived as 2.5 mJy.

Nevertheless, during our observations, we did detect a radio source coincident in position with the NVSS source with radio flux density of 8.9 mJy and rms noise of 0.19 mJy b^{−1} at J2000 position of, RA: 17h 39m 06s and DEC: −30d 18^′ 12^{′′} which lies 2.4^′ away from the X-ray source position. Thus we confirm from the above data that the radio source detected by VLA in the field of the X-ray source is not associated with the Galactic X-ray source.

IGR J17544−2619 : This transient source was discovered with INTEGRAL at a flux density of ∼ 160 mCrab in the 18 −− 25 keV bands (Sunyaev et al. 2003b). The X-ray variability with time scales of 1.5 −− 2 hrs seen in the data is ascribed to the binary nature of the X-ray source and is associated with the accretion-emission processes (Rodriguez et al. 2003). A ROSAT source IRXS J175428.3−262035 with the count rate of 0.08±0.02 counts s^{−1} (0.1 −− 2.4 keV) lies within the field of IGR J17544−2619. Optical and infrared parameters observed in the 2MASS survey give the magnitude J = 8.79 ± 0.02, H = 8.31 ± 0.03, K = 8.02 ± 0.03, thus suggesting the companion star to be an early O-type star. The GMRT image of the field of source IGR J17544−2619 at 0.61 GHz showed no significant radio flux density within the 3σ position uncertainty of the X-ray source. A 3σ upper limit for the radio emission from the GMRT data is <7 mJy with the rms noise of ∼ 2.2 mJy b^{−1}. No radio emission from the source region is seen even in the NVSS image. A 3σ upper limit from the NVSS data is estimated to be ∼ 3 mJy. The RXTE/ASM hardness ratio data for the source suggests that it was in the high soft state during our observations. A non detection of radio emission within the 4^{′′} (1.6σ) (Gonzalez-Riestra et al. 2004) position limit from XMM-Newton observations, during a high soft X-ray state of the source suggests

M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I 11

that there is no associated radio source for the X-ray source; however, the radio emission, if present, may be synchrotron self-absorbed at low frequency or highly variable, similar to some of the HMXBs below 1 GHz.

IGR J17597−2201 : The X-ray source is a weak transient source with a flux density level of 5 mCrab in 15 −− 40 keV energy band (Lutovinov et al. 2003). The RXTE observation shows variability of the source. The PCA spectra is, however, consistent with a power law with an additional soft X-ray excess. The measured spectral indices in the hard X-ray band range between 1.8 and 2.9. An Fe K emission line at 6.5 keV has been detected (Markwardt et al. 2003) in the X-rays. These observations suggest that IGR J17597−2201 is a binary system containing a neutron star as the compact companion. The GMRT observations on 16th Sep 2003 at 0.61 GHz were taken immediately after the discovery of the source with INTEGRAL. The radio image of the field showed no significant radio source within the 3σ position uncertainty circle of the X-ray source position. A 3σ upper limit for the radio flux density is derived as <7 mJy with the rms noise of ∼ 2.14 mJy b^{−1}. The analysis of the NVSS data also did not yield any radio flux density at 1.4 GHz and a 3σ upper limit is obtained as 3.5 mJy. An upper limit for the radio emission from the source clearly implies that if the prompt radio emission was indeed present, then either it was highly absorbed at low frequency or was variable.

IGR J18325−0756 : This is a transient, flat spectrum X-ray source discovered with IBIS at a flux density level of ∼ 10 mCrab in the 15 −− 40 keV band and ∼ 5 mCrab in the 40 −− 100 keV band. The source is variable in X-ray regime (Lutovinov et al. 2003). We observed the source with GMRT at 0.61 GHz during AO3 to look for any residual low frequency flux density from the active phase. No significant radio source was detected within the 3σ INTEGRAL position error circle. The GMRT 3σ upper limit for the radio flux density is ≤ 3 mJy. Thus our conclusion for non detection of radio emission is similar to IGR J17597−2201.

IGR J18483−0311 : This new transient source was discovered in Apr 2003 with a X-ray flux density of ∼ 10 mCrab in the 15 −− 40 keV band and a flaring behavior in the X-ray light curve was seen from the source (Chernyakova et al. 2003). The radio image of the field of IGR J18483−0311 with GMRT at 1.28 GHz showed no significant radio source within the 3σ upper limit of 4 mJy either at 0.61 GHz or 1.28 GHz. No significant source was detected even in the NVSS data. The 3σ upper limit at 1.2 GHz was 1 mJy. A non detection of the radio emission supports our previous conclusion.

IGR J19140+0951 : The X-ray source was discovered with IBIS/ISGRI at a flux density of ∼ 50 −− 100 mCrab between 15 and 40 keV (Hannikainen et al. 2003). The RXTE light curve of the source shows variations on short time scale. No QPO was seen in the power density spectrum of the source in the PCA/RXTE data, the X-ray spectrum is; however, well fitted by power-law + thermal component (Cabanac et al. 2004a). A broad ionized iron line is also seen in the spectral data. The source shows strong spectral variability more typical of X-ray binaries. A comparison of the ISGRI/JEMX and RXTE/PCA spectra reveals a state transition in the source from ‘steep power-law’ to ‘low hard’ (Schultz et al. 2004). Such a transition in spectral state is a characteristic of a BH LMXB (McClintock et al. 2003) thus suggesting the possibility of IGR J19140+0951 being a BH LMXB, though the absence of QPO does not fit this hypothesis. However; Rodriguez (private communication) suggests the HMXB nature of the source, with a neutron star as the central engine based on available RXTE and INTEGRAL data. We performed a series of ten radio observations with GMRT for the source at 0.61 and 1.28 GHz during the 2003 and 2004 observing seasons. No positive radio detection within the 1.6σ position error circle of 1.3^′ around the new refined position coordinate (Cabanac et al. 2004b) of the source was found during our observations. The upper limit for the GMRT radio flux density towards the source direction is derived as ≤ 5.5 mJy. No radio source corresponding to the X-ray source position was seen even in the NVSS data at 1.4 GHz. The absence of radio emission from the source as seen in other microquasars, viz XTE J1748−288, GRS 1758−258 below 1.4 GHz is also seen in IGR J19140+0951. Thus we confirm from our observations that the X-ray source has no radio counterpart, or if present, it is highly absorbed below 1.4 GHz.

4. Discussion

Among the seventeen sources for which GMRT data is presented in the previous section, radio counterparts are detected for seven objects that lie within the 3σ position error circle of the INTEGRAL source positions. Among these seven radio sources, the morphology for IGR J16479−4514 resembles a HII region while that of IGR J18539+0727 and IGR J21247+5058 indicates a radio galaxy. In the case of IGR J15479−4529, GMRT data do not fit a point source model, thereby suggesting an extended morphology more likely to be an extragalactic object. The sources IGR J06074+2205 and IGR J18027−1455 are unresolved source with extragalactic properties and are probably AGNs. The INTEGRAL source, IGR J17091−3624 for which coincident radio emission is measured from the GMRT data, qualify as a binary source and a possible microquasar candidate.

The sources IGR J16318−4848, IGR J16320−4751, IGR J17544−2619, IGR J17597−2201 and IGR J19140+0951 are suggested as X-ray binaries from the INTEGRAL studies; however, their radio counterparts are not yet detected, suggesting that either they are synchrotron self absorbed at low frequencies or have no

12 M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I

current radio emission. The sources IGR J16316−4028, IGR J16418−4532, IGR J17391−3021, IGR J18325−0756 and IGR J18483−0311 do not have low frequency radio counterparts and were not identified based on our survey. This points to either a variable nature of the radio emission or a persistent emission at much lower flux density than the GMRT threshold. As seen in Table 2, the position off-set of the possible radio counterparts with respect to the X-ray source position are of the order of few arcminutes and well within the 3σ error circle of the X-ray position. Hence such possible identifications are a reason to conduct even deeper optical and infrared follow-up observations.

A large number of accreting binary systems show a transient behavior in the X-ray band. The radio emission from X-ray binaries can be classified into two broad classes (1) X-ray sources with persistent radio emission are generally binary systems containing a BH or a NS with low magnetic field; (2) the sources with a highly variable and bright radio emission, are associated with jet-like outflows from their compact objects.

On the basis of X-ray spectral characteristics, their transient nature and their discovery in the high energy band, a majority of the INTEGRAL sources are believed to be Galactic HMXB. It is, therefore likely that during the transient outbursts, most of these sources will produce relativistic outflows, thereby giving rise to strong radio emission. Therefore, non-detection of radio flux density from a number of INTEGRAL sources may be due to the different X-ray state of the source at the time of our observations. Thus, near simultaneous observations in different wave bands are necessary to reveal the true nature of most of the INTEGRAL high energy sources.

Acknowledgements. We acknowledge the excellent support provided by the GMRT staff during our observations. We are also thankful to our colleagues at TIFR and NCRA for helpful discussions. This research had made extensive use of the NASA/IPAC extragalactic sources data base NED, Data from the NASA/NVSS survey and the public archives from the RXTE and INTEGRAL Satellites. MP is grateful to Director NCRA for providing the research facilities in Pune and is also thankful Prof. V. H. Kulkarni of Mumbai University for his constant support and encouragement. This research is supported by ISRO, grant No. DOS. 9/2/109/2003-II under its RESPOND program. MP also thanks Prof. Kulkarni V., Witta P., Green D., Rodriguez J., and Ribo M. for useful discussions.

References

Basko M., Sunyaev R., Titarchuk L., 1974, Astron. Astroph.

31, 249 Belloni T., Mendez M., King A., et al., 1997, ApJ, 488, L109 Bird A., Barlow E., Bassani L., et al., 2004, ApJ, 607, L33 Barth A., Luis H., Filippenko A., et al., 2001, ApJ., 546, 205- 209 C. O’ Dea, et al., 1998, ApJ, 488, L109 Cabanac C., Rodriguez J., Hannikainen D., et al., 2004a, ATEL 272

Cabanac C., Rodriguez J., Petrucci P., et al., 2004b, RMxAC, 20, 209 Ceballos M. and Barcons X., 2004, Multiwavelength AGN surveys conference proceedings, Cozumel, 17 Chenevez J., Budtz-Jorgensen C., Lund N., et al., 2004, ATEL 223 Chernyakova M., Lutovinov A., et al., 2003, ATEL 157 Combi, Ribo, Mirabel, et al., 2004, ATEL 246 Condon J. Mirabel, 1999, Proc. Natl. Acad. Sci., Vol. 96, pp.

4756-4758 Cordier B., Goldwurm A., Laurent P., et al., 1991, Adv.Sp.Res.

11, 169 Courvoisier T., Walter R., Rodriguez J., et al., 2003, IAUC 8063 de Plaa J., Hartog den P., Kaastra J., et al., 2003, ATEL 119 Fenimore E., Cannon M., 1978, Appl. opt. 17, 337 Filliatre & Chaty, 2004, ApJ, 616, 496 G. Matt & Guainazzi, et al., 2003, MNRAS, 341, L 13 Gonzalez-Riestra E., Oosterbroek T., Kuulkers E., et al., 2004, A&A, 420, 589 Hannikainen D., Rodriguez J., Pottschmidt K., et al., 2003, IAUC 8088 Haberl F., Motch C., Zickgraf F., 2002, A&A., 387, 201H Ishwara-Chandra, A. P.Rao, Pandey M., et al., 2005, ChJAA, 5, 87-92 Kuulkers E., Lutovinov A., Parmar A., et al., 2003, ATEL 149 Lebrun F., Leray J., Lavocat P., et al., 2003, A&A, v.411, pL141-148 Lutovinov A., Rodriguez J., et al., 2003, ATEL 151 Lutovinov A., Shaw S., et al., 2003, ATEL 154 Lutovinov A., Walter R., et al., 2003, ATEL 155 Lutovinov A., Rodriguez J., Produit N., et al., 2003, ATEL 151 Malizia A., Bassani L., et al., 2004, ATEL 227 Markoff S. & Nowak M. 2004, ApJ, 609, 972 Markwardt, Swank J., et al., 2003, ATEL 156 Masetti N., Palazzi E., Bassani L., et al., 2004, A&A, 426L, 41 McClintock J., Remillard R. 2003, ‘Compact Stellar X-ray sources, eds, Cam. Univ. Press’ Mirabel F., Gerard E., Rodríguez L. 1994, IAU Circ., 5958 Mirabel F., Harmon B., Deal K., et al., 1997, ApJ, 477, L85 Mirabel F., Marti J., Chaty S., et al., 1998, New Aston. Rev., 42, 9-10, 621-624 Mirabel F. and Rodríguez L. 1999, ARA&A, 37, 409 Molkov S., Mowlavi N., Goldwurm A., et al., 2003, ATEL 176 Pandey M., Durouchoux Ph., Manchanda R., et al., 2004, 5th INTEGRAL workshop proceedings held in Munich, ESA, SP-552, 695 Pooley G. 2004, ATEL 226 Revnivtsev M., Astron. Astroph. 2003a, A&A, 411, 329 Revnivtsev M., Lutovinov A. 2003b, Astron. Letters, Vol. 29, No. 11, pp.719-723 Rodriguez J., Foschini L., Goldwurm A., et al., 2004, ATEL 253 Rodriguez J., Goldwurm A. 2003, ATEL 201 Rodriguez J., Tomsick J. 2003, Foschini L., IAUC 8096 Rodriguez J., 2003, ATEL 194 Romero A., Gaztanaga E., Barriga., et al., 1999, A&A, 348 Ribo M., Combi J., 2003, ATEL 235 Rupen M., Mioduszewski A., Dhawan V. 2003a, ATEL 152 Rupen M., Mioduszewski A., Dhawan V. 2003b, ATEL 184 Schartel N., Ehle M., Breitfellner M., et al., 2003, IAUC 8072 Schultz J., Hannikainen D., Vilu O., et al., 2004, A&A, 423L, 17

M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I 13

Smith D., Heindl W., Swank J., et al., 2003, ATEL 182 Sugizaki M., Matsuzaki K., Kaneda H., et al. 2001(a), AIPC, 599, 959 Sugizaki M., Matsuzaki K., Kaneda H., et al. 2001(b), Ap.J.

Suppl. 134, 77 Sunyaev R., Lotovinov A., et al. 2003a, ATEL 181 Sunyaev R., Grebenev S., Lutovinov A., et al., 2003b, ATEL 190 Sunyaev R., Titarchuk, et al., 1980 Swarup G. 1991, Radio Interferometry techn.:Proceedings of 131st IAU Coll.,Astr. Scty. Pac., p.376-380 Tomsick J., Lingenfelter R., et al., 2003, IAUC 8076 Tomsick J., Lingenfelter R., Corbel S., et al., 2004, ATEL 224 Torres D., Romero G., Dame T., et al., 2003, Phys. Rep., 382, 303 Ubertini P., Bazzano A., Cocchi M., et al., 1999, Astroph.Lett.Comm. 38, 301 Van der Klis M., Wijnands R. 1999, Astrophys.J. 514, 939 Walter R., Bodaghee A., et al., 2004, ATEL 229 Wright & Barlow, 1975 Zand J. J. M., Heise J., et al., 2003, ATEL 229 67

14 M. Pandey et al.: GMRT Observations of the field of INTEGRAL X-ray sources- I

Table 2. Possible Radio counterparts of target INTEGRAL sources observed with GMRT

Source Date ν Sν σ Radio Pos. Off. Radio Sν dd/mm/yy (mJy b^{−1}) Pos. GMRT w.r.t Struc. (Total) (GHz) (mJy) RA & DEC Integral NVSS Pos. GMRT 1.4 GHz (mJy) IGR J06074+2205 01/02/04 1.28 36.00±1.12 0.64 06h 07m 18.45s±0.005 1.29^′ Point 36 22d 04^′ 52.49^{′ ′}±0.03 09/04/04 0.61 78.65±1.29 1.33 12/04/04 0.61 83.49±1.30 0.65 02/05/04 0.61 79.86±1.42 1.57 IGR J15479−4529 02/02/04 1.28 22.2 0.5 15h 47m 44.26s±0.105 3.98^′ Extended N/A −45d 32^′ 35.22^{′ ′}±1.76 IGR J16316−4028 02/02/04 1.28 ≤0.8 0.19

09/04/04 0.61 ≤6.00 1.35 12/04/04 0.61 ≤4.80 1.18 IGR J16318−4848 04/08/03 0.61 ≤6.50 2.13 N/A 15/09/03 0.61 ≤6.60 2.20 09/04/04 0.61 ≤7.00 2.41 IGR J16320−4751 29/07/03 1.28 ≤3.00 0.83 N/A 04/08/03 0.61 ≤4.00 1.23 15/09/03 0.61 ≤4.00 1.04 IGR J16418−4532 02/02/04 1.28 ≤1.00 0.33 N/A IGR J16479−4514 02/02/04 1.28 2445.45 1.24 16h 47m 47.75s±0.153 3.30^′ Extended N/A −45d 17^′ 07^{′′}±1.97 IGR J17091−3624 16/09/03 0.61 2.50±0.73 0.60 17h 09m 02s±0.191 0.99^′ Point 1.5 −36d 23^′ 33^{′′}±2.84 02/02/04 1.28 1.10±0.16 0.19 IGR J17391−3021 02/02/04 1.28 ≤1.04 0.19 ≤2.5 IGR J17544−2619 12/04/04 0.61 ≤7.35 2.46 ≤3 IGR J17597−2201 16/09/03 0.61 ≤7.90 2.42 ≤3.5 IGR J18027−1455 02/05/04 0.61 10.72±2.25 2.32 18h 02m 42.75s±0.134 4.18^′ Point 12.3 −14d 50^′ 49.21^{′ ′}±3.93 IGR J18325−0756 16/09/03 0.61 ≤3.00 0.75 ≤3.5 IGR J18483−0311 16/09/03 0.61 ≤4.24 1.27 02/02/04 1.28 ≤1.00 0.15 ≤1.6 IGR J18539+0727 02/02/04 1.28 5.25±0.25±0.14 0.16 18h 53m 52.54s±0.028 3.64^′ Double +07d 30^′ 39.07^{′ ′}±0.43 Point 5.85±0.50 18h 53m 52.19s±0.023 6 +07d 30^′ 37.31^{′ ′}±0.32 IGR J19140+0951 21/06/03 0.61 ≤5.50 1.28 ≤1.6 29/07/03 1.28 ≤0.80 0.15 04/08/03 0.61 ≤5.50 1.23 09/09/03 0.61 ≤5.00 1.14 15/09/03 0.61 ≤5.70 1.90 02/02/04 1.28 ≤0.50 0.15 07/04/04 0.61 ≤5.00 1.43 12/04/04 0.61 ≤5.00 1.28 02/05/04 0.61 ≤5.00 1.64 03/05/04 0.61 ≤5.00 1.20 IGR J21247+5058 07/04/04 0.61 184.81±1.59 1.25 21h 24m 39.63s±0.004 0.57^′ Extended 237 50d 58^′ 25.55^{′ ′}±0.04 09/04/04 0.61 178.41±1.38 1.61 12/04/04 0.61 173.81±1.59 1.71 02/05/04 0.61 177.71±1.17 1.52