arXiv:cond-mat/0110104v1 [cond-mat.mtrl-sci] 4 Oct 2001

Spectroscopic Studies of the Vibrational and Electronic Properties of Solid Hydrogen to 285 GPa

Alexander F. Goncharov, Eugene Gregoryanz, Russell J. Hemley, Ho-kwang Mao Geophysical Laboratory and Center for High Pressure Research, Carnegie Institution of Washington, 5251 Broad Branch Road NW, Washington D.C. 20015 U.S.A

We report Raman scattering and visible to near-infrared absorption spectra of solid hydrogen under static pressure up to 285 GPa at 85-140 K. We obtain pressure dependences of vibron and phonon modes in agreement with previously determined to lower pressures. The results indicate the stability of the ordered molecular phase III to the highest pressure reached and provide constraints on the insulator-to-metal transition pressure.

Recent theoretical predictions for transformation of crystalline solid hydrogen to its metal state are still uncertain and range between 260-410 GPa^1–^3. Metallization by band overlap is predicted to occur prior break down to a monoatomic state^3. The ability of theory to calculate the band gap at relevant densities is substantially impaired by the uncertainty of the structure of the high-pressure molecular modification of solid hydrogen - phase III (e.g., Ref.^4). The nature of this phase and its related infrared activity have been the topic of numerous theoretical and experimental studies (e.g. Ref.^5), but definitive knowledge of its crystal and electronic structure is not yet in hand.

Diamond-anvil cells have been used successfully to reach static pressures on the order of 360 GPa for compressed metals^6–^8. However, numerous attempts to compress solid hydrogen in order to transform it to conducting states^9–^{15} have not been successful in reaching the critical pressure range while at the same time characterizing the sample and pressure definitively. The claim of compressing solid hydrogen to 342 GPa^{15}, for instance, showed no evidence for the presence of hydrogen in the sample chamber, indicating that instead the ”soft” hydrogen was most likely lost by developing small leaks in diamonds and gasket or by reaction with the gasket material (see Ref.^4). In addition, the large stress-induced increase in optical absorption and fluorescence in diamond anvils^{6,16,17} poses a major obstacle in optical measurements of hydrogen samples and pressure calibration by ruby fluorescence. Control measurements for optical absorption experiments are essential. For example, comparison of the absorption of the transparent ruby grains adjacent to hydrogen can be used to ascertain that the pressure-induced changes in absorption occurs is in hydrogen but not in the diamond windows^9. At pressures beyond 180 GPa, the ruby fluorescence becomes extremely weak and can be overwhelmed by diamond fluorescence, thus presenting another serious problem for pressure calibration. As a result, the pressure for our previously reported onset of absorption in hydrogen could only be determined as being above 200 GPa, but the upper limit could not be established. Indirect methods of pressure calibration such as x-ray diffraction measurements on the gasket^{15} do not indicate the pressure of the sample, and pressure calibration based on the pressure shift of diamond Raman band^{18} may vary by as much as a factor of three depending upon the local nonhydrostatic stress condition on the pressure-bearing diamond anvil surface^{19,20}.

Infrared and Raman spectroscopies have been successfully used to obtain information about molecular orientational ordering, strength of intermolecular interactions, crystal structure, phase transitions, and charge transfer in hydrogen, but have been previously limited in the pressure range reached^{13,21}–^{27}. In this paper we extend spectroscopic measurements on solid hydrogen to 285 GPa, as well as accurate pressure determination by ruby fluorescence to 255 GPa. IR spectroscopy is particularly suited for ultrahigh pressure study of hydrogen because of the dramatic increase in vibron intensity in phase III. On the other hand, one must overcome the difficulty of focusing the diffraction limited IR beam to study microscopic samples in the diamond cell. For Raman spectroscopy, we must reduce the fluorescence background of the diamond by choosing anvils with very low initial fluorescence. We find that the hydrogen vibron persists to the highest pressure reached, indicating that the hydrogen molecules remain intact. We find that phase III persists while no unambiguous change of optical properties of hydrogen could be detected. We constrain the pressure of the transition to the metallic state to 325-495 GPa.

Our Raman and IR techniques are described elsewhere^{25,28}–^{30}. Near IR measurements were performed with a conventional and synchrotron source. We used natural type I beveled (8-10 degrees) diamonds with 30-50 μm culets. Here, we report the results of four different experiments, which ended up by diamond failure at 230-285 GPa. All experiments were done at low temperatures (78-140 K). In one of them (to 255 GPa) the sample contained a small amount of ruby, so Raman and IR absorption measurements could be performed along with accurate pressure measurements by ruby fluorescence using a direct pumping scheme with a Ti-sapphire laser (705-740 nm) as described in Ref.^{30}. Raman measurements were also performed with near-IR excitation. Other samples contained a large amount of ruby to improve the pressure distribution in the highpressure chamber. Since the vibron absorbance in phase III is rather high^{22}, we could afford to reduce an amount of hydrogen to approximately 1% of the whole sample volume at highest pressures. Visible optical absorption spectroscopy was used to further characterize the samples.

FIG. 1. Raman and IR absorption spectra of H2 at 248 GPa, 140 K (upper curves) and 205 GPa, 20 K (lower curves).

Figure 1 presents Raman and IR spectra at 250 GPa and at 205 GPa (p-H_2^{25}). The latter were obtained on a sample converted to pure p-H_2^{25} Raman spectra at 250 GPa reveal of a number of narrow low-frequency bands associated with librations and translations of molecules in accord with our previous study to 205 GPa in p-H_2^{25}. The spectra are qualitatively very similar; the pressure shift of the lattice and vibron modes will be discussed below. As in Refs.^{26,27}, we observe only one Raman vibron. The second one (which is much weaker) observed in Ref.^{25} is outside our available spectral range determined by the excitation wavelength and the sensitivity of the CCD detector. IR spectra are also in agreement with previous studies at lower pressures^{13,22}–^{25}. Comparison of the frequencies of the high-frequency IR bands with those of the low-frequency Raman spectrum suggest that they originate from combinations of the IR vibron and lattice modes^{22}–^{24}.

FIG. 2. Pressure dependence of the measured Raman and IR vibron frequencies compared to theoretical results. The large solid and open symbols are our IR and Raman data respectively. The solid curves are straight lines (guide to the eye). The small solid and open symbols connected by dotted lines are the calculations from the Ref.^{31} . The inset shows the IR absorption spectrum of composite a H2/ruby sample at 285 GPa. The inset in the bottom is the ruby fluorescence spectrum at 248 GPa measured by the direct pumping technique with 705 nm excitation. The pressure is determined from the spectral positions of N2 and R1 ruby lines according to the calibration of Ref.^{32} extrapolated to higher pressures. The accuracy of the pressure determination is estimated as ±5%.

Of particular interest is the 6200 cm^{−1} band, which represents the combination of the IR vibron and the highest frequency lattice mode, corresponding to the axial translational vibration^{22}–^{24}.

Figure 2 shows the pressure dependence of the IR- and Raman-active vibrons and lattice mode frequencies. The results obtained are in reasonable agreement with our previous study^{25}. In contrast, the pressures determined in Refs.^{22,24} by extrapolating the IR vibron frequency by the second order polynomial are substantially underestimated as noted in Ref.^{33}. For the IR absorption measurements above 250 GPa (Fig. 2 inset), the pressure was determined by linearly extrapolating the IR frequency. This determines the stability range of phase III on the basis optical measurements. Comparison of the measured frequencies with the results of recent theoretical calculations^{31} shows some discrepancies including both the number of the modes observed and their IR and Raman activity, however the pressure dependence (slope) is in reasonable agreement (Fig. 2). The same is true for the lattice modes (Fig. 3), although direct comparison is complicated because of a lack of specific assignment from both experiment and theory.

FIG. 3. Pressure dependence of the measured lattice mode frequencies and comparison with theoretical results. The solid and open symbols are our IR and Raman data, respectively. The solid lines are guides to the eye. The triangles connected by dotted lines are calculations from the Ref.^{31} . The pressure determination is described in the text and caption to Fig. 2 .

FIG. 4. Raman vibron frequency and highest phonon frequency (see text) as a function of density calculated according to measurements from the Ref.^{34} and extrapolated to high pressures.

The reason for the disagreement in the case of the vibron modes seems to originate from the structure of phase II proposed in Ref.^{31} (very similar structure was proposed earlier^{35}), which contains two different site symmetries for hydrogen molecules (with generally different bond length). As a result, two distinct manifolds of vibrons are predicted, which does not seem to be confirmed by the experiment. The experimental data indicate that the splitting between IR and Raman vibrons is dominated by vibrational (or factor-group) splitting^{22}, and the multiple site-group splitting (if any) does not play a substantial role, unlike the situation for several other molecular crystals (e.g., δ-N_2^{36}). If so, one can use a simplified bond-force model to predict the upper bound for dissociation of the hydrogen molecules (e. g. Ref.^{37}). The distinction between intra- and intermolecular bonding creates a gap in the vibrational density of states, which can be determined as a difference between the lowest vibron and the uppermost phonon (Fig. 4). Linear extrapolation of the frequencies to high density (pressure) give an intersection at ∼0.74 mole/cm^{−3} (495 GPa if using EOS from Ref.^{34}) for the point corresponding to the ”no gap” situation that is to the transition to the nonmolecular state (presumably metallic) assuming no further phase transitions occur. This kind of transformation path would require a structural resemblance between the nonmolecular and molecular phase (e.g, ice X^{38}) and may be preempted by band-overlap metallization within the molecular state, which could trigger a transformation to an altogether different molecular structure^{3,39}.

FIG. 5. Optical absorption spectra of a composite H2/ruby sample in a diamond anvil cell at different pressures and comparison with a similarly prepared N2 sample^{40}. The solid black and gray lines correspond to experiments with different H2 content.

Figure 5 shows optical absorption spectra of hydrogen samples mixtured with ruby. With increasing pressure an absorption edge appears on the high-energy side and shifts to lower energies. This absorption is presumably related to a closure of the band gap of diamond under nonhydrostatic conditions, as calculated in Ref.^{41} and observed experimentally^{6,17,43}. This absorption has a long tail with additional features. The 2.3 eV feature observed above 220 GPa has been previously reported in reflectivity spectra when metallic gaskets measured through the stressed diamond anvil^{42} and some of our N_2 absorption spectra^{40}; a peak at this energy can also be observed in fluorescence spectra of stressed diamonds^{16}. Comparison of spectra measured for two samples with different H_2 contents do not show substantial differences. Thus, no obvious absorption due to hydrogen could be observed in these experiments. For comparison, in our experiments on N_2 under similar conditions the absorption edge due to electronic interband transitions in the sample is quite obvious (Fig. 4), although thicker samples without ruby filler were needed to determine the band gap^{40}.

Resonance Raman scattering could provide an alternative independent way of measurement of the band gap since one expects a resonant increase of intensity of the Raman signal when incoming (and outgoing) phonon energies approach those of electronic excitations, including those associated with the band gap^{45}. We found evidence for this in our early experiments on H_2/ruby composite samples, although the pressure onset and the measure of the degree of enhancement could not be determined quantitatively^9. Accurate measurements of this kind require the use of an internal standard (or precision positioning of the sample) and correction for the absorption of hydrogen. The latter is not known because the background absorption of stressed diamond masks it (see above). Nevertheless, here we observed an increase of intensity (by a factor 1.5-2.5) of the librational modes with 716-724 nm excitation at highest pressures reached (250- 255 GPa) in our Raman experiment. Because of diamond failure, we were unable to determine whether any further increase in Raman intensity occurs at higher pressure.

FIG. 6. Band gap of hydrogen as a function of density. The solid line is the best fit to data of Ref.^{46} extended linearly to gap closure (long dashed line). The long dash-dotted lines are the theoretical calculations for different crystal structures of phase III^3. The dotted lines are the theoretical calculations for Pca21 , Cmc21 and P21/c structures (from left to right, respectively) of phase III from Ref.^{44} (the results are very close to each other). The solid diamond is Raman resonance scattering point obtained in Ref.^9. The solid circle is the similar point obtained in this work. The arrows show that the pressure could be underestimated^9 or the resonance conditions were not reached (see text). For comparison, estimations of the band gap of stressed diamond (this work) are also shown (inset shows the stressed- induced fluorescence of diamond at sample pressure of 196 GPa and 10 K). The double solid - dotted line corresponds to measurements of the peak positions of two strongest diamond fluorescence peaks, which may correspond to the band gap (no correction for the phonon energy, possibly involved in case of indirect gap, is made). The open circles are the absorption edge values of stressed type II diamond obtained from direct measurements under pressure^{43}. The gray solid line is a guide to the eye. The hydrogen density is calculated from Ref.^{34} (extrapolated above 120 GPa) by using the pressure measured inside the diamond anvil cell for all experimental data.

Figure 6 summarizes the results of determination of the band gap of hydrogen as a function of density by various methods. The extrapolation of the results of dielectric oscillator model fits based on interference fringe measurements^{46} can be considered a rough guide for the density dependence of the direct gap. Recently calculated theoretically band gaps for assumed Pca2_1, P2_1/c and Cmc2_1 structures^{3,44} are in agreement in terms of the slope but show smaller values, which is consistent with the fact that they are indirect gap values. Notably, some of the early calculations predicted very different density dependence for the direct and indirect gaps^{4,46}. The indications of the band gap energy from the resonance Raman scattering (Ref.^9 and this work) are also shown and are consistent with the general trend. No evidence for the direct band gap closure is found in our visible transmission measurements (Fig. 5), although a small indirect gap or even its closure cannot be ruled out because of a submicron thickness of the sample (see also Ref.^9). It is worth noting that the band gap of the stressed diamond also decreases with pressure^{41,43}. In one of our early experiments with synthetic diamonds^{25} we observed a stressed induced fluorescence as narrow bands shifting with pressure to lower energy (Fig. 6 inset), which can be related to the band gap closure of stressed diamond in agreement with data of Ref.^{43} and calculations^{41}. Note that the band gap of hydrogen and stressed diamond are estimated to be comparable at these pressures, which makes measurements of the band gap of hydrogen problematic by conventional optical techniques. Nevertheless, the data presented in Fig. 6 show that according to different estimations the direct band gap of hydrogen is expected to close at about 0.6-0.65 mole/cm^3, which correspond to pressures of 325-385 GPa (c.f. Ref.^{46}) according the equation of state of Ref.^{34}.

In conclusion, we have performed various optical measurements of hydrogen to 285 GPa. Vibrational and optical spectroscopy data provide different sets of constraints on the higher-pressure transformations, including both pressure induced dissociation to form a nonmolecular metallic solid and band-overlap metallization in which molecular bonding persists. Extrapolations of the vibron and phonon frequencies suggest transformation to a monoatomic state below 495 GPa. On the other hand, considerations of the absorption edge indicate the pressure of metallization at 325-385 GPa on the basis of tentative extrapolation of the direct band gap energy. Although this complicated by affects of stressed-induced diamond absorption and possible differences between the behavior of the direct and indirect gap, there appears to be an emerging consistence between various experimental and theoretical results, with a predicted transition at 325-495 GPa.

We acknowledge financial support of CIW, NSLS, NSF and W. M. Keck Foundation.

1 Nagao, K., Nagara, H., and Matsubara, S. (1997) Phys. Rev. B. 56, 2295-2298.

2 Natoli, V., Martin, R. M., and Ceperley, D. M. (1993) Phys. Rev. Lett. 70, 1952-1955.

3 Johnson, K. A. and Ashcroft, N. W. (2000) Nature 403, 632-635.

4 Hemley, R. J., Mao, H. K. (1994) Rev. Mod. Phys. 66 671- 692.

5 Kohanoff, J. (2001) J. Low Temp. Phys. 122, 297-311. 6 Vohra, Y. K., Luo, H., and Ruoff, A. L. (1990) Appl. Phys. Lett. 57, 1007-1111.

7 Mao, H. K., Wu, Y., Chen, L. C., Shu, J., and Jephcoat, A. P. (1990) J. Geophys. Res., 95, 21737-21742. 8 Hemley, R. J., Mao, H. K., Shen, G., Badro, J., Gillet, P., Hanfland, M., Häusermann (1997) Science 276, 1242-1245. 9 Mao, H. K. and Hemley, R. J. (1989) Science 244, 1462- 1465.

10 Eggert, J. H., Goettel, K. A. and Silvera, I. F. (1990) Europhys. Lett. 11, 775-781; 12, 381 (Addendum).

11 Mao, H. K., Hemley, R. J., and Hanfland, M. (1990) Phys.

Rev. Lett. 65, 484-487.

12 Eggert, J. H., Moshary, F., Evans, W. J., Lorenzana, H.

E., Goettel, K. A., Silvera, I. F., and Moss, W. C. (1991) Phys. Rev. Lett. 66, 193-196.

13 Chen, N. H., Sterer, E., and Silvera, I. F. (1996) Phys. Rev.

Lett. 76, 1663-1666.

14 Hemley, R. J., Mao, H. K., Goncharov, A. F., Hanfland, M., Struzhkin, V. (1996) Phys. Rev. Lett. 76, 1667-1670.

15 Narayana, C., Luo, H., Orloff, J., and Ruoff, A. L. (1998) Nature 393, 46-49.

16 Mao, H. K. and Hemley, R. J. (1991) Nature 351, 721-724. 17 Ruoff, A. L., Luo, H., and Vohra, Y. K. (1991) J. Appl.

Phys. 69, 6413-6416.

18 Hanfland, M. and Syassen, K. (1985) J. Appl. Phys. 57, 2752-2756.

19 Schiferl, D., Nicol, M., Zaug, J. M., Sharma, S. K., Cooney, T. F., Wang, S. Y., Anthony, T. R., and Fleischer, J. F. (1997) J. Appl. Phys. 82, 3256-3265.

20 Xu, J. and Mao, H. K. (2000) Science, 290, 783-785. 21 Mazin, I. I., Hemley, R. J., Goncharov, A. F., Hanfland, M. and Mao, H. K. (1997) Phys. Rev. Lett. 78 1066-1069.

22 Hanfland, M., Hemley, R. J., Mao, H. K. (1993) Phys. Rev.

Lett. 70, 3760-3763.

23 Hanfland, M., Hemley, R. J., i Mao, H. K., and Williams, G. (1992) Phys. Rev. Lett. 69, 1129-1132.

24 Hanfland, M., Hemley, R. J., Mao, H. K. (1994) High- Pressure Science and Technology-1993, edited by S. C. Schmidt et al. (AIP, New York), p. 877-880.

25 Goncharov, A. F., Hemley, R. J., Mao, H. K., Shu, J. (1998) Phys. Rev. Lett. 80, 101-104.

26 Hemley, R. J., Mao, H. K. (1988) Phys. Rev. Lett. 61, 857-860.

27 Lorenzana, H. E., Silvera, I. F., and Goettel, K. A. (1989) Phys. Rev. Lett. 63, 2080-2083.

28 Hemley, R. J., Goncharov, A. F., R. Lu, Struzhkin, V. V., Mao, H. K. (1998) Il Nuovo Cimento 20, 539-551.

29 Hemley, R. J., Goncharov, A. F., Mao, H. K., Karmon, E., and Eggert, J. H. (1998) J. Low Temp. Phys. 110, 75-88.

30 Goncharov, A. F., Struzhkin, V. V., Hemley, R. J., Mao, H.

K., and Liu, Z. (1999) in: Science and Technology of High

Pressure, edited by M. H. Manghnani, W. J. Nellis and M. F. Nicol (Universities Press, Hyderabad, India, Honolulu, Hawaii, 1999), Vol. 1, p. 90-95.

31 Kohanoff, J., Scandolo, S., de Gironcoli, S., and Tosatti, E. (1999) Phys. Rev. Lett. 83, 4097-4100.

32 Eggert, J. H., Moshary, F., Evans, W. J., Goettel, K. A., and Silvera, I. F., (1991) Phys. Rev. B 44, 7202-7208.

33 Hemley, R. J., Mazin, I. I., Goncharov, A. F., and Mao, H.

K., (1997) Europhys. Lett. 37, 403-407.

34 Loubeyre P., LeToullec, R., Häusermann, D., Hanfland, M., Hemley, R. J., Mao, H. K., and Finger, L. W. (1996) Nature 383, 702-704.

35 Tse, J., Klug, D. (1995) Nature 378, 595-597. 36 LeSar, R., Ekberg, S. A., Jones L. H., Mills, R. L., Schwalbe, L. A., Schiferl, D. (1979) Sol. State Commun. 32, 131-134.

37 Ashcroft, N. W. (1990) Phys. Rev. B 41, 10963-10971. 38 Goncharov, A. F., Struzhkin, V. V., Somayazulu, M. S., Hemley, R. J., and Mao, H. K. (1996) Science 273, 218- 220.

39 Mazin, I. I. and Cohen, R. E. (1995) Phys. Rev. B 52, R8597-R8600.

40 Gregoryanz, E., Goncharov, A. F., Hemley, R. J., and Mao, H. K. (2001) Phys. Rev. B 64, 052103-052106.

41 Nielsen, O. H. (1986) Phys. Rev. B 34, 5808-5819. 42 Vohra, Y. K. (1991) in: Recent Trends in High Pressure Research Proc. of the XIII International Conference on High Pressure Science and Technology, edited by A. K. Singh. pp. 349-358.

43 Syassen, K. (1982) Phys. Rev. B 25, 6548-6550. 44 Städele, M. and Martin, R. (2000) Phys. Rev. Lett. 84, 6070-6073.

45 Martin, R. M., and Falicov, L. M. in:Light Scattering in Solids Topics in Applied Physics, vol. 8, edited by M. Cardona (Springer-Verlag, New York 1983), pp. 79-145.

46 Hemley, R. J., Hanfland, M. and Mao, H. K. (1991) Nature 350, 488-491.